4,6-8,10,25,38,44,45,47,50-52,59,61,62

0200000500000010001
453252
0266
80439000000
69,70
0200000500000010002
4,9,11,12
0200000500000020001
453251
3
0200000500000040001
3-8,10,12
0200000500000050001
6,10,11,13,17,(14-22),(23-35)
0200000500000060001
453259
5,11-17,19-28
0200000500000080001
453261
29,31-38,40
0200000500000080002
(4-10)
0200000500000080003
(39-53),52,54
0200000500000110001
(4-10),11,13-21,23-38
0200000500000110002
(40-46)
0200000500000110003
26,28
0200000500000130001
453250
13-19,22,62,67,84
0200000500000130002
453265
2-12
0200000500000130003
453266
(44-82)
0200000500000270001
(59-65),(71-75)
0200000500000270002
453262
(81-85),89
0200000500000270003
(5-13),(19-27),31,33,(37-43),(47-53)
0200000500000270004
453260
(2-40)
0200000500000270005
453263
14/13,4,6,8,10,12,16,16
0200000500000290001
1-9,(10-30)
0200000500000310001
(15-23)
0200000500000310002
(32-40)
0200000500000310003
(4-8),(16-30),(3-7),(13-19)
0200000500000340001
48,50
0200000500000340002
(21-31)
0200000500000340003
453264
(34-40),44,46
0200000500000340004
(1-15)
0200000500000380001
(51-69),(73-79),83,85,91,95
0200000500000390001
(31-41),45,47
0200000500000390002
(2-8),22
0200000500000400001
(3-7),(10-14),15,20,24
0200000500000400002
(24-36),(40-50)
0200000500000410001
3,4,7,10-13,16-23,26,28,(31-37)
0200000500000410002
2ª34
0200000500000410003
11,14,17,21,25,45,47,57,63
0200000500000440001
3-6,(34-46)
0200000500000450001
(3-7)
0200000500000490001
2,4,4,(8-12)
0200000500000490002
(9-13),(19-27)
0200000500000490003
(2-8),14,20,22,24
0200000500000510001
3,7,13,15,17
0200000500000510002
21,23,29-34,(36-44),50
0200000500000510003
54,(60-64),68
0200000500000510004
72
0200000500000510005
(76-78),(82-88)
0200000500000520001
(52-58),(62-66)
0200000500000520002
(26-46)
0200000500000520003
(61-75)
0200000500000520004
19,21,27,29,31,35
0200000500000520005
(39-45),51,55,57
0200000500000520006
4,6
0200000500000520007
9,(15-19),(14-28),(25-41)
0200000500000530001
6ª2
0200000500000530002
1-16
0200000500000550001
17,19-28
0200000500000550002
(31-45),(30-46),50,54-57,61,74,71,79
0200000500000550003
81-86
0200000500000550004
3-6,8,11,14
0200000500000640001
(27-35),(30-36),40
0200000500000650001
12-26
0200000500000650002
1-9
0200000500000650004
10/40,16/39,46/30,50/16,1,4,6,12-15,20
0200000500000740001
21,22-24,26,28,29,(32-44),46,47,48
0200000500000740002
(10-24)
0200000500000790001
(9-23)
0200000500000790002
(118-126),117
0200000500000810001
(68-74),(78-84),88,(90-96)
0200000500000810002
(100-116)
0200000500000810003
(2-6)
0200000500000810004
(2-16),(20-28),(32-52)
0200000500000850001
47ª9
0200000500000850005
(12-28),(33-41),47
0200000500000860001
(13-29)
0200000500000860002
7ª
0200000500000860003
(3-7),8-10
0200000500000860004
0200000500000870001
4
0200000500000870002
(14-48)
0200000500000910001
(29-63),(69-79)
0200000500000910002
(6-12)
0200000500000910003
(3-13),(17-23)
0200000500000910004
(48-88)
0200100100000200002
450078
0278
80401390000
(73-95)
0200100100000200003
450005
(3-63)
0200100100000200004
0274
80401375000
(90-300)
0200100100000200005
450001
(65-71)
0200100100000200006
(2-46)
0200100100000200007
(1-57)
0200100100000220001
450076
0200100100000220003
(59-301)
0200100100000220005
0275
80401380000
(48-300)
0200100100000220007
(2-76)
0200100100000350001
(93-301)
0200100100000350002
(78-300)
0200100100000350003
(1-91)
0200100100000350004
(20-54)
0200100100000390001
450006
(19-53)
0200100100000390002
55-300
0200100100000390003
1-18
0200100100000390004
450015
(1-11)
0200100100000520001
450112
0277
80401385000
(2-300),(13-301)
0200100100000520003
0273
80401370000
(1-301)
0200100100000710001
450022
(2-300)
0200100100000710002
0200100100000870001
450106
0200100100000870002
450092
(4-300)
0200100100001080001
450097
(3-5)
0200100100001080002
(7-301)
0200100100001080003
1
0200100100001080004
0200100100001090001
450103
(23-301)
0200100100001090002
(1-21)
0200100100001090003
(8-300)
0200100100001090004
(2-34)
0200100100001310001
450065
(36-300)
0200100100001310002
450068
(1-29)
0200100100001310003
(31-301)
0200100100001310004
0200100100001450001
22-300
0200100100001450002
(2-20)
0200100100001450003
(2-10)
0200100100001550001
450077
(135-301)
0200100100001550003
(134-300)
0200100100001550004
(1-5)
0200100100001550005
3-300
0200100100001620001
2
0200100100001620002
0200100100001620003
58-300
0200100100001700001
57
0200100100001700002
46-56
0200100100001700003
1-44
0200100100001700004
45
0200100100001700005
(60-300)
0200100100001750002
(2-50)
0200100100001750003
(52-58)
0200100100001750004
(83-301)
0200100100001750005
(1-25)
0200100100001750008
(27-81)
0200100100001750009
(2-22),(26-28)
0200100100001840001
450057
(93-301),(72-300)
0200100100001840003
450071
0276
80401384000
(27-29)
0200100100001840004
(30-58),(62-70)
0200100100001840005
0200100100001840006
(17-301)
0200100100001900001
(11-15)
0200100100001900002
(22-32)
0200100100001900003
0200100100001900005
(1-9)
0200100100001900006
(54-300)
0200100100002050001
(2-52)
0200100100002050002
0200100100002050003
11
0200100100002140001
450074
(2-18)
0200100100002140002
(13-45)
0200100100002140003
(56-300)
0200100100002140004
0200100100002140007
(47-301)
0200100100002140008
0200100100002170002
450061
(1-19),(23-301)
0200100100002170003
35
0200100100002210002
450064
1-34,36-301
0200100100002210003
(2-42),(1-45),(110-300),(73-91),105
0200100100002280001
450095
0272
80401365000
(44-108),(47-71),(93-103),109
0200100100002280002
450014
(2-72)
0200100100002340001
450104
(74-300)
0200100100002340002
(1-61)
0200100100002340003
(63-301)
0200100100002340004
(1-9),(2-10)
0200100100002360001
11-300
0200100100002360002
1ª3
0200100100002360003
(2-52),90
0200100100002430001
0200100100002430002
0200100100002430003
(54-88),(92-300)
0200100100002430004
0200100100002590001
2-301
0200100100002590002
(86-300)
0200100100002600001
(79-127)
0200100100002600002
(1-77)
0200100100002600003
(2-84)
0200100100002600004
(1-37)
0200100100002750001
(107-301)
0200100100002750002
(85-105)
0200100100002750003
(2-38)
0200100100002750004
0200100100003200001
(88-300)
0200100100003200002
(54-86)
0200100100003200003
(1-45)
0200100100003200004
(113-301)
0200100100003200005
(47-111)
0200100100003200006
(16-18)
0200100100003270001
(15-17)
0200100100003270002
19-300
0200100100003270003
1-14
0200100100003270004
1-31,(33-45),47-170
0200100100003280001
171-300,(32-46)
0200100100003280002
450080
(2-42)
0200100100003290002
450059
(11-57)
0200100100003290003
(44-50)
0200100100003290004
0200100100003290006
(2-28)
0200100100003300001
(30-300)
0200100100003300002
0200100100003300003
(11-301)
0200100100003300004
97-300
0200100100003320001
(94-96)
0200100100003320002
95
0200100100003320003
1-93
0200100100003320004
1-114
0200100100003430001
450027
119-301
0200100100003430002
450030
0200100100003460001
(125-141)
0200100100003460002
450038
(143-413)
0200100100003460003
(53-81)
0200100100003460004
0200100100003460005
(83-123)
0200100100003460006
30
0200100100003630001
(10-28)
0200100100003630002
(51-301)
0200100100003630003
450032
(2-8)
0200100100003630004
450044
(32-84)
0200100100003630005
(1-49)
0200100100003630006
0200100100004020001
(7-57)
0200100100004020002
(59-75),(79-81)
0200100100004020003
(83-91)
0200100100004020004
0200100100004020005
(12-64)
0200100100004020006
0200100100004020007
(92-300)
0200100100004020008
(88-90)
0200100100004020009
(66-86)
0200100100004020010
(31-33)
0200100100004190001
67-127
0200100100004190002
9-30
0200100100004190003
(129-137)
0200100100004190004
(139-175)
0200100100004190005
(177-207)
0200100100004190006
(128-160)
0200100100004190007
(162-300)
0200100100004190008
(35-65)
0200100100004190009
1-8
0200100100004190010
(32-66)
0200100100004190011
0200100100004260001
(21-27)
0200100100004260002
(68-300)
0200100100004260003
(28-66)
0200100100004260004
(29-65)
0200100100004260005
0200100100004270001
(142-146),(174-300)
0200100100004270002
(35-57)
0200100100004270003
(59-117)
0200100100004270004
(20-40)
0200100100004270005
(42-140)
0200100100004270006
(1-33)
0200100100004270007
(119-125),129,(159-301)
0200100100004270008
(30-42)
0200100100004280001
(114-300)
0200100100004280002
450096
(143-161),(169-301)
0200100100004280003
(24-28)
0200100100004280004
(44-112)
0200100100004280005
(4-8),(20-22)
0200100100004280006
(25-99)
0200100100004280007
(101-139)
0200100100004280008
450054
0200100100004290001
(10-300)
0200100100004290002
(1-3)
0200100100004290003
(5-301)
0200100100004290004
14-300
0200100100004380001
(3-13)
0200100100004380002
(2-8),1
0200100100004380003
450062
(40-44)
0200100100004630001
(46-300)
0200100100004630002
(2-30)
0200100100004630003
(1-51)
0200100100004750001
(58-300)
0200100100004750002
0200100100004750003
(48-56)
0200100100004750004
(53-69)
0200100100004750005
(102-300)
0200100100004810001
(13-301)
0200100100004810002
(2-92)
0200100100004810003
0200100100004810004
0200100100004840001
0200100100004840003
(1-19)
0200100100004840004
(21-301)
0200100100004840005
0200100100004920001
(27-37)
0200100100004920002
(39-301)
0200100100004920003
0200100100004920004
(56-300),(35-51),(79-301)
0200100100005060001
0200100100005060002
0200100100005100001
(76-300)
0200100100005100002
(7-59)
0200100100005100003
(2-70)
0200100100005100004
(72-74)
0200100100005100005
(61-301)
0200100100005100006
(1-93)
0200100100005450001
141-301
0200100100005450002
(95-139)
0200100100005450004
(2-140)
0200100100005450005
8
0200100100005540001
(28-300)
0200100100005540002
450081
0200100100005540003
(7-11)
0200100100005540004
(10-26)
0200100100005540005
(17-19)
0200100100005540006
(13-15)
0200100100005540007
0200100100005540008
0200100100005540009
0200100100005610001
(31-61)
0200100100005610002
(44-56)
0200100100005610003
0200100100005610004
(14-34)
0200100100005610005
(2-12)
0200100100005610006
(63-83)
0200100100005610007
(85-301)
0200100100005610008
0200100100005640001
0200100100005640002
0200100100005640003
(2-24)
0200100100005650001
(26-300)
0200100100005650002
0200100100005650003
0200100100005650004
(199-301)
0200100100005700001
197
0200100100005700002
(1-9),(105-139),15
0200100100005700003
(141-169),(179-183)
0200100100005700004
(142-160)
0200100100005700005
(164-412)
0200100100005700006
(2-6),(10-28),(80-130)
0200100100005700007
162
0200100100005700008
(120-134)
0200100100005810001
(2-118)
0200100100005810002
(117-301)
0200100100005810003
(136-300)
0200100100005810004
(113-115)
0200100100005810005
(1-111)
0200100100005810006
(1-23)
0200100100005880001
(25-41)
0200100100005880002
(43-55)
0200100100005880003
(22-26)
0200100100005880004
0200100100005880005
(12-300)
0200100100006080001
0200100100006080002
0200100100006080003
2,(23-35)
0200100100006110001
(7-21),(37-301)
0200100100006110002
(4-300),(1-5)
0200100100006110003
0200100100006130001
(3-19)
0200100100006130002
450073
(180-500)
0200100100006130003
(22-178)
0200100100006130004
0200100100006130005
(3-11)
0200100100006200001
(24-36)
0200100100006200002
(38-300)
0200100100006200003
(12-22)
0200100100006200004
0200100100006200005
(13-25)
0200100100006200006
0200100100006200007
0200100100006210001
18-301
0200100100006210002
0200100100006400001
(11-29)
0200100100006400002
(26-38)
0200100100006400004
0200100100006400005
0200100100006550001
(42-300)
0200100100006550002
0200100100006550003
0200100100006550004
0200100100006560001
(55-61)
0200100100006560002
(56-92)
0200100100006560003
(81-301)
0200100100006560004
450075
(134-144)
0200100100006560006
450055
(146-300)
0200100100006560007
0200100100006720001
(9-15)
0200100100006720002
0200100100006720003
(1-7)
0200100100006720004
(15-301)
0200100100006770001
(14-18),(32-300),11,22
0200100100006770002
1-10,12,13,20,(24-30)
0200100100006770003
(2-74)
0200100100006790001
(80-300)
0200100100006790002
(75-91)
0200100100006790003
(93-115)
0200100100006790004
(1-73)
0200100100006790005
(20-300)
0200100100006800002
0200100100006800003
0200100100006830001
0200100100006830002
0200100100006830003
(17-25)
0200100100006830004
(49-65),(48-86)
0200100100006830005
(67-301)
0200100100006830006
0200100100006830007
0200100100006830008
(1-301),(2-90),116
0200100100006860001
450019
(92-114),(118-300)
0200100100006860002
450003
(16-20)
0200100100006940001
(22-46)
0200100100006940002
47-300
0200100100006940003
0200100100006940004
(15-45)
0200100100006940005
(60-80),(84-300),(129-133)
0200100100007040001
(59-127),(135-301),82
0200100100007040002
1-58
0200100100007040003
0200100100007080001
19-301
0200100100007080002
(2-18),(1-17)
0200100100007230001
(20-300),(19-301)
0200100100007230002
(1-43)
0200100100007510001
(63-93),(97-103),(48-68)
0200100100007510003
0200100100007510004
0200100100007510005
(70-104)
0200100100007510006
(45-61)
0200100100007510007
(2-96)
0200100100007520001
(98-300)
0200100100007520002
0200100100007520003
0200100100007520004
(2-32)
0200100100007530001
(17-19),(23-301)
0200100100007530002
0200100100007530003
0200100100007530004
28-301
0200100100007540001
(19-27),1
0200100100007540002
(20-26)
0200100100007540003
0200100100007540004
0200100100007550001
0200100100007550002
0200100100007550003
0200100100007710001
0200100100007710002
(49-77)
0200100100007710003
(5-47)
0200100100007710004
(62-80)
0200100100007710005
(38-60)
0200100100007710006
0200100100007710007
98,100
0200100100007710008
(82-96)
0200100100007710009
(79-189)
0200100100007710010
(191-301)
0200100100007710011
0200100100007720001
0200100100007720002
9-300
0200100100007720003
(2-36)
0200100100007770001
0200100100007770002
(1-41)
0200100100007770003
(43-301)
0200100100007770004
(1-17)
0200100100007810001
37
0200100100007810002
(19-21)
0200100100007810003
(70-86)
0200100100007810004
(88-108)
0200100100007810005
450098
(20-44)
0200100100007810006
(39-45)
0200100100007810007
(49-147)
0200100100007810008
15
0200100100007850001
(68-330)
0200100100007850002
0200100100007850003
(43-47)
0200100100007850004
(1-13)
0200100100007850005
0200100100007850006
0200100100007850007
(17-41)
0200100100007850008
(2-16)
0200100100007870001
0200100100007870002
0200100100007870003
(18-300)
0200100100007870004
0200100100008080001
(52-68),72,(76-78)
0200100100008080002
(57-67),(71-301)
0200100100008080003
0200100100008080004
0200100100008080005
(45-55)
0200100100008080006
(32-86)
0200100100008110002
(19-301)
0200100100008110003
0200100100008110004
0200100100008110006
(1-27)
0200100100008200001
0200100100008200002
450039
0200100100008200003
0200100100008200004
(65-301)
0200100100008260001
(2-4)
0200100100008260002
0200100100008260003
(14-300)
0200100100008260004
(1-35)
0200100100008260005
(37-63)
0200100100008260006
(13-21)
0200100100008490002
0200100100008490003
0200100100008490004
(52-300)
0200100100008520001
(49-55)
0200100100008520002
(57-301)
0200100100008520003
(2-44)
0200100100008520004
0200100100008700001
0200100100008700002
(1-53)
0200100100008700003
(55-301)
0200100100008700004
0200100100009050001
(2-8),(12-32),(42-50),(54-300)
0200100100009050002
(5-49),(57-301)
0200100100009050003
(18-26)
0200100100009090001
0200100100009090002
1-17
0200100100009090003
0200100100009090004
(2-44),46
0200100100009220001
450043
0200100100009220002
0200100100009220003
0200100100009220004
23,25,27
0200100100009320002
450002
0200100100009320004
1-22,24,26
0200100100009320005
54-301
0200100100009440001
450029
(44-48)
0200100100009440002
0200100100009440003
(38-42)
0200100100009440006
0200100100009440007
(19-27)
0200100100009440008
(10-16)
0200100100009580001
(18-34)
0200100100009580003
(47-71)
0200100100009580004
(4-8)
0200100100009580005
3ª1
0200100100009580006
(7-45)
0200100100009580007
0200100100009580010
0200100100009580011
(15-99)
0200100100009600002
(2-82)
0200100100009640001
(84-90)
0200100100009640004
(1-187)
0200100100009640005
(34-300)
0200100100009740001
(20-32)
0200100100009740002
0200100100009740003
0200100100009740004
(34-44),32
0200100100009820001
0200100100009820002
0200100100009820003
(15-31)
0200100100009820004
(35-59)
0200100100009820005
0200100100009820006
0200100100009820007
0200100100009890001
(2-110)
0200100100009910001
(112-300)
0200100100009910002
(1-123)
0200100100009910003
(125-301)
0200100100009910004
(1-65)
0200100100009940001
(67-121)
0200100100009940002
(2-64)
0200100100009940003
0200100100009940004
(1-21),(2-22)
0200100100009960001
100-114,116-301,(69-99)
0200100100009960002
0200100100010050001
(87-93)
0200100100010050002
(120-300)
0200100100010050003
(195-301)
0200100100010050004
(86-102)
0200100100010050006
(1-3),(11-85)
0200100100010050007
(97-169)
0200100100010050008
(104-118)
0200100100010050009
(2-54)
0200100100010080001
0200100100010080002
0200100100010080003
0200100100010080004
0200100100010110001
0200100100010110002
(1-9),(2-12)
0200100100010220001
(14-24)
0200100100010220002
0200100100010220003
(11-49)
0200100100010220004
0200100100010220005
1-74,(76-88)
0200100100010260001
(144-300)
0200100100010260002
(90-142)
0200100100010260003
(129-137),(141-153),(177-301)
0200100100010260004
(91-127)
0200100100010260005
0200100100010470001
0200100100010470002
132-301
0200100100010890001
0200100100010890002
(98-130)
0200100100010890003
(1-83)
0200100100010890004
(85-131)
0200100100010890005
0200100100010930001
(2-300),(55-301)
0200100100010930002
0200900100000250001
452000
0255
80405000000
(2-30),(13-35)
0200900100000250002
(2-12),(1-43)
0200900100000480001
72,(71-81)
0200900100000480002
(14-68)
0200900100000480003
(2-82),(1-55)
0200900100000640001
(132-140),(105-119),125
0200900100000640002
(84-130),(57-103)
0200900100000640003
452006
0200900100000720001
(38-64),5,11,15,17
0200900100000720002
(8-34),1
0200900100000720003
(22-66),(19-49)
0200900100000830001
(2-20),(1-17)
0200900100000830002
(2-34),(1-5)
0200900100001130001
(36-40),(7-11)
0200900100001130002
(2-28),34,(1-23)
0200900100001180001
(30-58),(25-65)
0200900100001180002
(2-72),(1-65)
0200900100001350001
(74-108),(67-111)
0200900100001350002
0201100100000010001
453511
0256
80410000000
(117-223)
0201100100000010002
453512
(81-115)
0201100100000010003
453501
(128-222)
0201100100000010004
(2-86)
0201100100000010005
(102-126)
0201100100000010006
(111-141)
0201100100000020001
0201100100000020002
(53-57)
0201100100000020003
(126-180)
0201100100000020004
0201100100000020005
(44-54)
0201100100000020006
(1-81)
0201100100000040001
0201100100000040002
(83-165)
0201100100000040003
(84-148)
0201100100000040004
0201100100000130001
453500
0201100100000130002
453505
(39-43)
0201100100000130003
(45-57)
0201100100000130004
(59-79)
0201100100000130005
(81-151)
0201100100000130006
(104-148)
0201100100000130007
0201100100000130008
(56-74)
0201100100000130009
(76-102)
0201100100000130010
(1-75)
0201100100000140001
(77-85)
0201100100000140002
(2-66)
0201100100000140003
33
0201100100000170001
(1-31)
0201100100000170002
(35-37)
0201100100000170003
(39-63)
0201100100000170004
(65-89)
0201100100000170005
(91-143)
0201100100000170006
0201100100000170007
(26-64)
0201100100000170008
(68-88)
0201100100000170009
(1-113)
0201100100000290001
453502
(115-139)
0201100100000290002
453503
(2-68)
0201100100000290003
(70-90)
0201100100000290004
(1-115),(24-58)
0201100100000680001
453504
(8-22)
0201100100000680002
(35-207)
0201100100000850002
(124-186)
0201100100000850003
453507
(36-122)
0201100100000850005
0201100100000860001
(18-64)
0201100100000860002
(19-65)
0201100100000860003
0201100100000880001
(71-95)
0201100100000880002
(97-181)
0201100100000880003
(124-178)
0201100100000880004
0201100100000880005
(46-52)
0201100100000880006
(54-62)
0201100100000880007
(64-70)
0201100100000880008
(72-76)
0201100100000880009
(37-69)
0201100100000880010
17
0201100100000910001
36
0201100100000910002
38
0201100100000910003
0201100100000910004
0201100100000910005
(19-23)
0201100100000910006
(5-7)
0201100100000910007
0201100100000910008
(32-34)
0201100100000910009
(40-52)
0201100100000910010
0201100100000930001
0201100100000930002
(18-104)
0201100100000930003
(19-83)
0201100100000930004
0201100100000940001
(2-26)
0201100100000940002
(27-93)
0201100100000940003
(28-94)
0201100100000940004
(142-172)
0201100100001130001
0201100100001130002
(1-79)
0201100100001240001
(81-171)
0201100100001240002
(134-174)
0201100100001240003
(2-132)
0201100100001240004
(1-203)
0201100100001250001
(205-231)
0201100100001250002
0201100100001250003
(86-88)
0201100100001250004
(1-135)
0201100100001320001
(137-145)
0201100100001320002
0201100100001320003
(38-52)
0201100100001320004
0201100100001330001
(35-43)
0201100100001330002
0201100100001330003
(38-50)
0201100100001330004
(1-115)
0201100100001340002
(117-199)
0201100100001340003
(116-216)
0201100100001340004
(2-114)
0201100100001340005
(23-29)
0201100100001440001
(31-51)
0201100100001440002
(9-21)
0201100100001440003
0201100100001440004
(20-34)
0201100100001440005
(36-54)
0201100100001440006
(62-92)
0201100100001440007
(16-998)
0201300100000370001
452450
0257
80415000000
(5-999)
0201300100000370002
0201300100000370003
452453
(2-14)
0201300100000370004
(1-63)
0201300100000440001
(2-120)
0201300100000440002
(65-999)
0201300100000440003
452451
(122-998)
0201300100000440004
0201300100000550001
0201300100000550002
(32-998)
0201300100000550003
(45-999)
0201300100000550004
(1-29),(2-30)
0201500100000030001
453430
0258
80417000000
(31-55),(32-46)
0201500100000030002
453434
(2-24),(1-35)
0201500100000260001
(26-96),(37-97)
0201500100000260002
453431
(119-125),92,100
0201500100000310001
(2-90),(94-98),(1-117)
0201500100000310002
(33-47),(36-60)
0201500100000380001
(2-34),(1-31)
0201500100000380002
(69-83),(60-70)
0201500100000500001
(2-58),(1-67)
0201500100000500002
(2-52),(3-55)
0201500100000780001
0201500100000780002
(85-87),(100-110)
0201500100000830001
(2-98),(1-83)
0201500100000830002
(26-28),(35-49)
0201500100000840001
(2-24),(1-33),(51-57)
0201500100000840002
(2-72),(1-71)
0201500100000890001
(74-140),(73-117)
0201500100000890002
(2-8),(1-19)
0201500100001020001
0201500100001070001
(18-44),(21-43)
0201500100001070002
0201500100001140001
(5-15)
0201500100001170001
(2-40),(17-111)
0201500100001170002
0201500100001180001
0201500100001180002
0204200100000030001
453101
0268
80445000000
(11-17)
0204200100000030002
453129
0204200100000030003
(28-36)
0204200100000030004
0204200100000080001
453128
(23-145)
0204200100000080002
453100
(142-300)
0204200100000080003
453120
0204200100000110001
(55-101)
0204200100000110002
453130
(4-48)
0204200100000110003
(50-100)
0204200100000110004
0204200100000150001
453115
0204200100000150002
453124
0204200100000150003
0204200100000150004
(3-301)
0204200100000390001
0204200100000390002
1,2
0204200100000390003
453126
0204200100000540001
0204200100000540002
0204200100000540003
0204200100000540004
0204200100000550001
453121
0204200100000550002
453103
0204200100000550003
0204200100000550004
(1-67)
0204200100000610001
(69-301)
0204200100000610002
(2-62)
0204200100000610003
(64-300)
0204200100000610004
(1-159)
0204200100000620001
(161-301)
0204200100000620002
0204200100000620003
(34-400)
0204200100000620004
0204200100000690001
0204200100000690002
0204200100000690003
0204200100000820001
453107
(29-301)
0204200100000820002
(5-27)
0204200100000820003
0204200100000820004
0204200100000820005
0204200100000980001
(75-301)
0204200100000980002
0204200100000980003
0204200100000980004
0204200100001040001
(45-301)
0204200100001040002
0204200100001040003
0204200100001040004
(3-47)
0204200100001110001
(49-301)
0204200100001110002
453112
0204200100001110003
0204200100001180001
453109
0204200100001180002
0204200100001180003
0204200100001180004
0204200100001190001
0204200100001190002
(16-300)
0204200100001190003
0204200100001190004
0204200100001210001
453118
0204200100001210002
(30-90),112,116
0204200100001210005
0204200100001210006
(1-133)
0204200100001220001
0204200100001220002
0204200100001220003
(2-140),142 
0204200100001220004
0204200100001310001
0204200100001310002
453104
0204200100001310003
0204200100001310004
0204200100001360001
0204200100001360002
0204200100001360003
0204200100001360004
0204200100001430001
0204200100001430002
(2-58)
0204200100001430003
0204200100001430004
0204200100001440001
(16-30)
0204200100001440002
0204200100001440003
(32-300)
0204200100001440004
0204200100001450001
0204200100001450002
0204200100001450003
64,70
0204200100001450004
0204200100001470001
0204200100001470002
0204200100001470003
0204200100001470004
0204200100001490001
(25-49)
0204200100001490002
0204200100001490003
453116
(12-30)
0204200100001490004
0204200100001490005
0204200100001490006
(1-71)
0204200100001520001
(73-301)
0204200100001520002
(24-300)
0204200100001520003
0204200100001620001
(177-301)
0204200100001620002
(25-175)
0204200100001620003
(2-22)
0204200100001620004
(200-300)
0204200100001620005
(24-198)
0204200100001620006
0204200100001690001
(147-301)
0204200100001690002
(9-145)
0204200100001690003
0204200100001690004
0204200100001690005
(8-140)
0204200100001690006
0204200100001780001
0204200100001780002
0204200100001780003
0204200100001780004
0204200100001810001
(3-301),1
0204200100001810002
0204200100001810003
(1-39)
0204200100001860001
(41-301)
0204200100001860002
0204200100001860003
(40-300)
0204200100001860004
0204200100001890001
0204200100001890002
(1-89)
0204200100001940001
(91-301)
0204200100001940002
0204200100001940003
0204200100001940004
0204200100001960001
(39-71)
0204200100001960002
(2-14),18,20
0204200100001960004
(22-32),16
0204200100001960005
(1-175)
0204200100002050001
0204200100002050002
(132-300)
0204200100002050003
(2-130)
0204200100002050004
0204200100002060001
0204200100002060002
0204200100002060003
(22-300)
0204200100002060004
0204200100002100001
(53-301)
0204200100002100002
0204200100002100003
0204200100002100004
0204200100002310001
0204200100002310002
0204200100002310003
0204200100002310004
2,2 ,24
0204200100002390001
0204200100002390002
(7-301),5
0204200100002390003
0204200100002390004
0204200100002530001
0204200100002530002
0204200100002530003
0204200100002530004
0204200100002550001
0204200100002550002
0204200100002550003
0204200100002550004
0204200100002560003
0204200100002580001
0204200100002580002
(2-60)
0204200100002580003
(62-300)
0204200100002580004
0204200100002600001
(33-301)
0204200100002600002
0204200100002600003
0204200100002600004
0204200100002700001
(169-301),167
0204200100002700002
(17-167)
0204200100002700003
(10-188)
0204200100002700004
(190-300)
0204200100002700005
0204200100002700006
0204200100002750001
(27-301)
0204200100002750002
0204200100002750003
0204200100002750004
0204200100002760001
(9-301)
0204200100002760002
0204200100002760003
0204200100002760004
0204200100002890001
0204200100002890002
0204200100002890003
0204200100002890004
0204200100002970001
0204200100002970002
0204200100002970003
0204200100002980001
0204200100002980002
0204200100002980003
0204200100002980004
0204200100003050001
(19-73)
0204200100003050002
0204200100003050003
(18-84)
0204200100003050004
0204200100003050005
0204200100003050006
0204200100003140001
0204200100003140002
0204200100003140003
0204200100003140004
0204200100003170001
0204200100003170002
0204200100003170003
0204200100003170004
0204200100003280001
(247-301),245 
0204200100003280002
(27-245)
0204200100003280003
0204200100003280004
(242-300)
0204200100003280005
(30-240)
0204200100003280006
0204200100003330001
(101-137)
0204200100003330002
(139-301)
0204200100003330005
(47-79)
0204200100003330006
(81-99)
0204200100003330007
(116-132)
0204200100003330008
(134-154)
0204200100003330009
(156-198)
0204200100003330010
(2-56)
0204200100003330011
0204200100003330012
(58-114)
0204200100003330013
0204200100003380001
0204200100003380005
0204200100003390001
0204200100003390002
(2-78)
0204200100003390003
0204200100003390004
0204200100003410001
(25-301)
0204200100003410002
0204200100003410003
0204200100003410004
0204200100003470001
0204200100003470002
0204200100003470003
0204200100003480001
0204200100003480002
0204200100003530001
0204200100003530002
0204200100003550001
(39-301),9
0204200100003550002
0204200100003550003
0204200100003550004
0205900100000110001
453400
0259
80419000000
(24-52),(1-57)
0205900100000110002
453406
(2-60),(1-65)
0205900100000810001
(62-112),(67-119)
0205900100000810002
453403
(2-132),(1-131)
0205900100001330001
453401
(133-999),(134-998)
0205900100001330002
453405
(2-46),(1-99)
0205900100001470001
(48-98)
0205900100001470002
(2-34),(1-29)
0205900100001480001
(36-98),(31-99)
0205900100001480002
(17-65)
1100000100000030001
167031
1101
87401000000
(69-75)
1100000100000030002
167001
1100000100000030003
167016
(19-55),(2-8),14,(18-22)
1100000100000150001
167026
1121
(3-13),10
1100000100000150002
167018
(24-42)
1100000100000150003
167021
1-54,56-75
1100000100000210001
167000
55,87
1100000100000210002
167009
12-29
1100000100000250001
35-114
1100000100000250002
167011
(106-114),111
1100000100000320001
167005
75,81
1100000100000320002
(2-28),(5-31)
1100000100000320003
(38-96),(39-57)
1100000100000320004
1,1 
1100000100000370001
1100000100000370002
5,(40-56)
1100000100000370003
167023
2-5,7-10
1100000100000530001
6,14
1100000100000530002
167004
30-32,38
1100000100000610001
40-233
1100000100000610002
(2-26),(1-11)
1100000100000610003
(2-22),(1-19)
1100000100000630001
26
1100000100000630002
167019
(101-195),(100-180)
1100000100000640001
(182-228),(197-231)
1100000100000640002
22,33,33 ,(37-51)
1100000100000670001
1100000100000670002
(2-48),(5-29),35,35 
1100000100000670003
6-67
1100000100000710001
78-84
1100000100000710002
(4-26)
1100000100000740001
(3-15)
1100000100000740002
(5-7),(2-6),(9-27),(10-32)
1100000100000760001
(59-85),(50-88)
1100000100000760002
(34-48),(29-53)
1100000100000760003
8,9
1100000100000760004
167010
(3-17),(4-14)
1100000100000800001
18,20,21
1100000100000800002
(64-100),(57-81)
1100000100000850001
(8-58),(1-33)
1100000100000850002
3-53
1100000100000860001
56-59
1100000100000860002
76,91
1100000100000880001
(2-66),(1-87)
1100000100000880002
5,13,15,17
1100000100000890001
(2-34),(7-11)
1100000100000890002
1,(5-63),24
1100000100001040001
3,64
1100000100001040002
(3-15),4,6
1100000100001080001
(2-12),20
1100000100001080002
(1-5),(19-53),(22-70)
1100000100001090001
(2-18),(7-17)
1100000100001090002
45,47,53
1100000100001160001
(3-43),(49-51),(2-140),(55-117)
1100000100001160002
(119-197),(142-174)
1100000100001160003
167002
1100000100001310001
167983
1100000100001310002
27,(121-131),160,164,369
1100000100001340001
(1-25),29,(4-10)
1100000100001340002
(75-119),(86-152)
1100000100001340003
(14-84),(41-71)
1100000100001340004
(170-200)
1100000100001340005
(350-372),(351-375)
1100000100001340006
167014
1-19
1100000100001350001
1100000100001350002
(33-45),(52-60)
1100000100001350003
(22-44)
1100000100001350004
2-49,50,51
1100000100001360001
(71-81)
1100000100001360002
(50-74),(53-69)
1100000100001360003
120
1100000100001480001
167981
17-56
1100000100001480002
(3-9)
1100000100001490001
1100000100001490002
(77-133),116
1100000100001620001
(118-140),(135-145)
1100000100001620002
(2-114),(1-75),89
1100000100001620003
(29-31),(28-32)
1100000100001760001
1,3,(4-26)
1100000100001760002
(57-61)
1100000100001900001
(2-22),(1-53),55
1100000100001900002
(24-46),55
1100000100001900003
1,1/4,(29-33),64
1100000100001940001
(2-60),(9-27)
1100000100001940002
47,49,(66-82)
1100000100001940003
14-20
1100000100002000001
3-12
1100000100002000002
1100000100002080001
(104-144)
1100000100002080002
17,19,21,23
1100000100002120001
(2-26),(7-15),17
1100000100002120002
25-38
1100000200000690001
169906
1103
87410000000
(72-76),(55-59)
1100000200000690002
169907
(2-24),(5-21)
1100000200000690003
169901
(42-56),(39-49)
1100000200000690004
169900
53
1100000200000690005
169912
(58-70)
1100000200000690006
169908
(34-56),(29-49)
1100000200000720001
(6-32),(1-21)
1100000200000720002
(2-22),(1-29)
1100000200000870001
(28-30),(35-41)
1100000200000870002
2-9
1100000200001040001
47-52
1100000200001040002
11-42
1100000200001040003
12
1100000200001100001
1-11
1100000200001100002
1100000200001130001
9-21
1100000200001130002
23-43
1100000200001130003
34-74
1100000400000500001
169841
1104
87415000000
1-32
1100000400000500002
169840
10-35
1100000400000640001
36-69
1100000400000640002
1100000400000640003
169849
6,8,10,12,14,16
1100000400000650001
1,3,5,9
1100000400000650002
169842
1-6,8
1100000800000020001
169311
1102
87425000000
22/12,23/14,9-18,19,20,21,24
1100000800000020002
169314
3/16,5,7,9,11
1100000800000050001
169313
4,10,12,14
1100000800000050002
(1-13),14,15,,
1100000800000200001
17-49
1100000800000200002
1-22
1100000800000240001
41,43
1100000800000240002
3,4,5
1100000800000260001
8,9,11,12,13,14,16,17,19,21
1100000800000260002
169316
8,12,16,22,24,26,30,(37-51)
1100000800000310001
169305
1-8,9-11,13-21,(23-29),(31-35)
1100000800000310002
169309
74/42,53-58,60,66,64,68,70,72,76
1100000800000310003
169319
9-26
1100000800000320001
1100000800000320002
8/12,6,14
1100000800000410001
169312
7/10,3,5
1100000800000410002
1100000800000420001
8/32,16/32,1-7,9,10,12,14,(18-28)
1100000800000420002
46/27,(30-38),42,44,50
1100000800000420003
1,3,5
1100000800000460001
1100000800000480001
39/2,(26-34),41,43,45,49,51
1100000800000480002
(4-12),16,(15-23),20,22,24,27,(31-37)
1100000800000480003
(36-48),(53-77),74
1100000800000480004
4-9
1100000800000600001
10-17,19-23
1100000800000600002
1-3
1100000800000600003
6,10,(11-17),20,21,22,26,28
1100000800000620001
169300
23-27,29,30,32,34,36
1100000800000620002
15/6,1-13
1100000800000640001
14,15,17-22,24,26,30
1100000800000640002
(4-26),15
1100000800000680001
(19-35),(30-42),26,43,45,46
1100000800000680002
169310
16-57
1100000800000840001
1100000800000840002
25/52
1100000800000840003
(7-13),16
1100000800000850001
(1-5),(2-16)
1100000800000850002
(9-15),10,(14-24),(17-23)
1100000800000880001
1,3,4,5,6,7,8
1100000800000880002
25,26,(27-37)
1100000800000880003
1-7,(8-22)
1100000800000970001
(9-13),(28-38),(46-50),54
1100000800000970002
1-3,5-7,9
1100000800001010001
4,8
1100000800001010002
11,,12,(13-25),16
1100000800001010003
(1-11),(15-39),(45-51),53,(55-91)
1300000100000040001
430023
1327
89401000000
53,(123-131),(135-141)
1300000100000040002
430028
(6-18),28,36,24
1300000100000040003
430034
2-10
1300000100000070001
430017
(1-21),(4-40)
1300000100000310001
29,(37-43),47,49,(53-59),6 
1300000100000310002
(44-54),56,56
1300000100000310003
(23-27),(31-35),45,(58-86)
1300000100000310004
430021
(4-10),(14-18),22,24
1300000100000330001
430013
(1-13),(17-37),(26-44)
1300000100000330002
2,2/1,2/3,2/4,2/6,2/7,2/8,2/9,2/10,2/11
1300000100000330003
(1-13),(2-20),163
1300000100000380001
430010
1326
(17-77),(22-84)
1300000100000380002
1328
1300000100000400001
430000
(108-160),99
1300000100000400002
430027
(1-13),(2-36)
1300000100000640001
430007
(33-45),63 
1300000100000640002
(7-11),(2-14),15,17
1300000100000810001
30,(34-62),(49-57)
1300000100000810002
(23-27),(31-35),41,43
1300000100000810003

1300000100000820001

1300000100000820002
(1-107),(2-102),110
1300000100001200001
430005
(109-131)
1300000100001200002
(2-8),10,10¡,10¢,12
1300000100001280001
(1-11),10
1300000100001280002
(35-49),(44-70)
1300000100001340001
430004
(1-33),(2-42)
1300000100001340002
(14-20),23,(24-34),44,(50-60),64
1300000100001360001
(55-179),(96-178)
1300000100001360002
(6-30)
1300000100001370002
1300000100001400001
1300000100001400002
(1-103),(2-110)
1300000100001420001
(105-121),(112-132)
1300000100001420002
1,2,3,4,5,6,7,8,9,10,11,12
1300000100001650001
,
1300000100001650002
(1-39),(2-40)
1300000100001670001
41-54,(56-62)
1300000100001670002
(1-25),(2-26)
1300000100001740001
(27-95),(30-92)
1300000100001740002
(1-5),(2-22)
1300000100001760001
21,21 ,(66-84)
1300000100001760002
(40-54),(58-64),13,15
1300000100001760003
(24-38),22
1300000100001760004
(1-17),2,4,38,(23-27),31
1300000100001950001
(6-24),34,11
1300000100001950002
(25-33)
1300000100001980001
1300000100001980002
(11-19)
1300000100002040001
(1-59),4,4,6
1300000100002280001
24,24ª3,(73-85)
1300000100002280002
(8-22),(61-71)
1300000100002280003
(86-144),(9-61)
1400000100000180001
677004
1447
1435
98401000000
(3-5),(2-56)
1400000100000180002
677001
(2-54),(1-55)
1400000100000190001
677009
(56-104),(63-99)
1400000100000190002
677015
2,58
1400000100000360001
677000
(14-54),(13-41)
1400000100000360002
677027
(16-64),(7-55)
1400000100000380001
(66-86),(57-99)
1400000100000380002
(1-5),(2-14)
1400000100000380003
(16-38),(17-33)
1400000100000410001
(2-10),(7-15)
1400000100000410002
1-55
1400000100000750001
(56-86),(57-105)
1400000100000750002
(60-72)
1400000100000790002
677013
(28-80),(35-83)
1400000100000810001
(1-33),(2-26)
1400000100000810002
(2-18),(3-9)
1400000100000850001
(24-54),(13-33)
1400000100000850002
(38-46),(29-43)
1400000100000930001
677008
(2-18),(1-15)
1400000100000930002
(20-36),(17-27)
1400000100000930003
1-13
1400000100000940001
(14-32)
1400000100000940002
(36-42)
1400000100000940003
677005
1400000100001010001
1400000100001010002
(1-27),(2-20)
1400000100001020001
(22-52),(29-43)
1400000100001020002
(4-28)
1400000100001090001
1400000100001090002
(42-46)
1400000100001090003
(42-58)
1400000100001200001
1400000100001200002
677007
(2-16),22,(3-21)
1400000100001290001
(30-38),(23-29)
1400000100001290003
(42-62),(33-63)
1400000100001290004
(115-119)
1400000100001320001
(43-73)
1400000100001320002
134-178
1400000100001320003
677010
(23-33)
1400000100001320004
(20-62),64/2,(35-37)
1400000100001320005
(64-124),(75-113)
1400000100001320006
(12-46),(31-39)
1400000100001370001
108,53,55,57
1400000100001370002
(2-12),(1-11)
1400000100001730001
(16-36),(17-23),(27-39)
1400000100001730002
(10-30),(5-29)
1400000100001750001
31,33,35
1400000100001750002
(8-38),(5-25)
1400000100001780001
(44-52),(33-53)
1400000100001780002
(1-59),(2-54)
1400000100001890001
(56-106),(61-115)
1400000100001890002
(56-106),(3-51)
1400000100001900001
1400000100001900002
(27-91),(60-72),86/1
1400000100001910001
(74-76),(93-95)
1400000100001910002
(3-25),(2-14),41,56
1400000100001910003
(38-46),(21-29)
1400000100001920001
(4-36),(1-19)
1400000100001920002
2,4
1400000100002210001
5-24
1400000100002210002
1400000100002270001
(80-86),63
1400000100002270002
14,16,18
1400000100002430001
(7-19)
1400000100002430002
1400000100002430003
(26-36),(71-91),65/1
1400000100002450001
(10-22),(17-69)
1400000100002450002
(2-6),(1-15)
1400000100002450003
(32-48),(111-121)
1400000100002510001
(2-30),(9-103)
1400000100002510002
(4-16)
1400000100002550001
(22-118),(1-121)
1400000100002550002
(78-114),(31-105)
1400000100002600001
(66-74),61,63
1400000100002600002
(2-16),(5-21)
1400000100002700001
(34-54),(35-59)
1400000100002700002
1-67
1400000200000050001
678960
1434
98406550000
69-81
1400000200000050002
(21-37)
1400000200000080001
(12-20)
1400000200000080002
678966
(1-19),(6-10)
1400000200000080003
678967
(2-22),(3-7),9,ª1,11
1400000200000110001
(17-21),25
1400000200000110002
678962
(6-20),(13-29)
1400000200000160001
1400000200000160002
678965
2,ª1
1400000200000160003
(1-19),(2-6)
1400000200000200001
(8-24),(21-25)
1400000200000200002
(13-33)
1400000200000240001
1400000200000240002
1,3
1400000200000290001
1400000200000290002
(1-31),(2-24)
1400000200000460001
(33-47),(28-42)
1400000200000460002
(1-9),(2-22)
1400000200900060001
678980
98406565000
(11-49),(24-50)
1400000200900060002
678981
(1-47),(2-52)
1400000200900660001
(49-79),(56-80)
1400000200900660002
1/82,3
1600000100000140001
420097
1655
92401367000
2,4-999
1600000100000140002
420061
(1-87)
1600000100000220001
420049
(2-80)
1600000100000220002
1684
1659
92401380000
88-999
1600000100000220003
420059
14,5,6,7,155 
1600000100000250001
420087
1686
1660
92401385000
1-4,8-999
1600000100000250002
420073
(27-61),50
1600000100000260001
420132
1685
1657
92401379000
(1-25),38
1600000100000260002
420126
1600000100000260003
420133
1600000100000260004
420137
(1-57),(2-36)
1600000100000360001
420037
1683
1661
92401363000
(38-998),(59-999)
1600000100000360002
420047
77-999
1600000100000630001
420136
(25-71)
1600000100000630002
420103
(2-12),21,21,23
1600000100000630003
(20-50)
1600000100000630004
15-48
1600000100000760001
420088
4,6,6,7
1600000100000760002
420029
1-12
1600000100000790001
13-999
1600000100000790002
1,28-999
1600000100000820001
(3-27),(2-26)
1600000100000820002
420036
1600000100000940001
9-999
1600000100000940002
(15-47),(26-58)
1600000100001010001
420091
(1-13),(2-24)
1600000100001010002
1600000100001140001
(13-999),(14-998)
1600000100001140002
(13-27)
1600000100001200001
420033
1658
92401377000
(2-14),(24-998),(1-11),(41-999)
1600000100001200004
420102
1656
92401370000
1600000100001210001
420013
,(1-35),(39-999)
1600000100001210002
420111
33,(37-67),(40-126)
1600000100001270001
(71-83),(236-246),260,101,9,270,300
1600000100001270002
420085
(2-38),(1-35)
1600000100001270003
(1-19),(2-48)
1600000100001420001
(21-999),(50-998)
1600000100001420002
(1-29),(2-36)
1600000100001630001
31
1600000100001630002
420060
35/1,37-67
1600000100001630003
1600000100001750001
420104
45,(6-24)
1600000100001750002
420101
(1-41),(2-42)
1600000100002030001
(45-107)
1600000100002030002
420098
(1-41),(2-48)
1600000100002080001
(45-139),(50-148)
1600000100002080002
,(33-51),(55-999)
1600000100002180001
420043
2,53/70,(1-31)
1600000100002180002
(1-29),(2-18)
1600000100002360001
420080
(22-34),(35-49)
1600000100002360002
420044
(1-15),83
1600000100002510001
420057
1600000100002510002
(21-25)
1600000100002510003
420039
(59-123),(82-112)
1600000100002550001
420095
(4-26),(1-29)
1600000100002550002
(28-80)
1600000100002550003
(31-57)
1600000100002550004
1600000100002580002
2,(3-15),4,16
1600000100002580003
(20-38),(17-43)
1600000100002580004
18 ,18¡
1600000100002700001
,(1-17),(19-999)
1600000100002700002
420105
(84-112),(37-73),(83-111)
1600000100002710002
(4-34),(46-80),(3-33),90,115
1600000100002710003
1-7
1600000100002720001
420139
(11-39)
1600000100002720002
420141
1,(2-28)
1600000100002750001
,(29-999)
1600000100002750002
(24-48),(87-115)
1600000100002760001
(6-22),(61-81)
1600000100002760002
(35-55),(2-4)
1600000100002760003
420094
(3-15),(6-52),(31-37)
1600000100002920001
1,2,53-65,ª14
1600000100002920002
1/24,2/22
1600000100002920003
420045
(5-11),(10-134)
1600000100002960001
420032
(13-151)
1600000100002960002
(45-51)
1600000100003000001
420071
(1-999),(2-10),(14-998)
1600000100003100001
420127
1600000100003100003
17-128
1600000100003360001
(1-13),(2-10)
1600000100003360002
(29-51)
1600000100003370001
(2-90)
1600000100003370002
(9-17),(21-39),(20-40)
1600000100003610001
420089
1600000100003610002
1-17,19-999
1600000100003640001
1600000100003640002
1600000100003710001
420066
(81-133),98,88
1600000100003710002
420034
(100-158),(177-185)
1600000100003710003
(160-186),(187-205)
1600000100003710004
1600000100003800001
1600000100003800002
27,28,29,45-52,54-999
1600000100003930001
(30-44),53
1600000100003930002
1-26
1600000100003930003
420012
(1-9),(17-999),(18-998)
1600000100004040001
(6-16),11,15
1600000100004040002
(2-32),(1-25)
1600000100004110001
(27-99),(34-98)
1600000100004110003
2,6,(3-13),(12-24),103
1600000100004250001
(28-38),46,48,54
1600000100004250002
1,2,4,6,8,10,12,14,16-999
1600000100004380001
3,5,7,11,13,15
1600000100004380002
(1-49),(2-48)
1600000100004840001
50-999
1600000100004840002
13
1600000100005000001
(70-100)
1600000100005000002
420138
(1-25),(2-18)
1600000100005000003
(33-83)
1600000100005000004
420110
(24-60),31
1600000100005000005
1-12,40
1600000100005010002
(61-89)
1600000100005020001
1600000100005020002
1600000100005020004
(26-48),52
1600000100005020007
(1-15),(2-14)
1600000100005080001
16-999
1600000100005080002
(1-23),(2-14)
1600000100005170001
1/151
1600000100005170003
420025
(3-69),(2-62)
1600000100005390001
(71-999),(64-998)
1600000100005390002
(59-999)
1600000100005550001
(4-110),(17-57)
1600000100005550002
(1-19),(2-10)
1600000100005590001
(21-999),(12-998)
1600000100005590002
(1-25),(4-10),(14-50)
1600000100005630001
12,12 ,(29-47),57-63
1600000100005630002
(1-23),(2-26)
1600000100005660001
49,51,53,(28-32)
1600000100005660002
420124
1600000100005720001
1600000100005720002
(47-999),(50-998)
1600000100005750001
(10-48),(9-45)
1600000100005750002
420107
1-15,17-20,22-999
1600000100005770001
420075
21,16
1600000100005770002
1600000100005860001
4-999
1600000100005860002
(1-43),(2-46)
1600000100005870001
(45-999),(48-998)
1600000100005870002
420021
31,42,(41-45)
1600000100006210001
(4-20),(36-998)
1600000100006210002
1600000100006260001
1600000100006260002
(2-8),3
1600000100006280001
(19-73),(10-46)
1600000100006280002
(11-25),24,26
1600000100006290001
(32-58),(81-113),59
1600000100006290002
25 ,28,(31-77)
1600000100006290003
1600000100006310001
420007
1-3,5-999
1600000100006310002
1-98,100-106,112-999
1600000100006340001
(1-9),2,4,13
1600000100006420001
6,8
1600000100006420002
(11-999),(8-998)
1600000100006450001
(39-49),(50-60)
1600000100006540001
(64-68)
1600000100006540002
2,(18-998),(9-999)
1600000100006570001
(1-7),(4-16)
1600000100006570002
168-999
1600000100006600001
154-166
1600000100006600002
1-153
1600000100006600003
1600000100006610001
1-6,12-999
1600000100006610002
35,18
1600000100006700001
420008
2-33
1600000100006700002
1-5,7,9-13,15-999
1600000100006820001
6,8,14
1600000100006820002
17,18,22
1600000100006940001
1,2,(19-23),15
1600000100006940002
1600000100007090001
12-28
1600000100007090002
1600000100007230001
1600000100007230002
(27-57),(28-60)
1600000100007280001
(15-25),20,22,1£¨
1600000100007280002
3,5,(6-14)
1600000100007290001
24-999
1600000100007290002
1600000100007640001
15-999
1600000100007640002
(121-999),(154-998)
1600000100007660001
(5-113),(4-152)
1600000100007660002
(17-85),(18-68)
1600000100007730001
(3-15),4,16
1600000100007730002
1-50
1600000100007880001
51-999
1600000100007880002
40,42-999
1600000100008050001
(1-41),(2-38)
1600000100008050002
(35-69),(40-70),72,73,74,75,77-999
1600000100008070001
420015
(2-38),(1-31)
1600000100008070002
71
1600000100008070003
76
1600000100008070004
(17-999),(24-998)
1600000100008180001
(1-15),(2-22)
1600000100008180002
(8-998),(17-999)
1600000100008200001
(9-15),(2-6)
1600000100008200002
1-30,68-999
1600000100008390001
31-67
1600000100008390002
1-24,26-28,30-999
1600000100008440001
420054
25,29
1600000100008440002
420026
1-48
1600000100008660001
49-999
1600000100008660002
1600000100008670001
1600000100008670002
1600000100008680001
1600000100008680002
1600000100008690001
1600000100008690002
1600000100008700001
1600000100008700002
(68-80)
1600000100008720001
7,9,9,21,23,29,29
1600000100008720002
(47-63),31,32,34,37
1600000100008720003
23,25-999
1600000100008760001
(1-21),(2-24)
1600000100008760002
(2-92),(1-91)
1600000100008860002
(1-9),(2-20)
1600000100009760001
420004
17 ,17¡,17¢,94,94,96,11
1600000100009760002
10,(32-56),(60-64),70,(76-92)
1600000100009760003
(1-5),(8-12)
1600000100009800001
(15-27),(16-50),37
1600000100009800002
138,(26-136),(140-998),(5-999)
1600000100009870001
420048
138
1600000100009870002
420064
(2-24),3
1600000100009870003
38,40,42,44-999
1600000100009990001
(2-36),(1-43)
1600000100009990002
73,75
1600000100010180001
(2-8),(88-998),(1-3),(59-71)
1600000100010180002
(5-57),(10-86)
1600000100010180003
2-13
1600000100010190001
14-999
1600000100010190002
6,(10-18),20,22
1600000100010250001
4,2,4,8
1600000100010250002
(5-33),(10-28)
1600000100010270001
1600000100010270002
1,3,8,(35-999),(30-998)
1600000100010270003
420078
(1-51),(2-52)
1600000100010420001
53-150
1600000100010420002
(2-50),(1-49)
1600000100010480001
52-999
1600000100010480002
1600000100010500001
1600000100010500002
(1-23),(4-32)
1600000100010510001
90,91,93,29/81,95
1600000100010510002
2,(44-998),
1600000100010730001
(4-42),17
1600000100010730002
1,3,5,(4-12),(26-56),(27-71)
1600000100010750001
(58-72),74-999
1600000100010750002
(1-27),(2-40)
1600000100010880001
(29-39),41-999
1600000100010880002
14,16,18,20-999
1600000100011020001
(1-19),(2-12)
1600000100011020002
27-999
1600000100011030001
1600000100011030002
1600000100011660001
2,4,33,35
1600000100011660002
(76-106),112,116
1600000100011950003
420140
(8-34),(1-29),37,38-60,68
1600000100012090001
31,70-84
1600000100012090002
1600000100012090003
6
1600000100012090004
(1-29),(2-24)
1600000100012110001
(41-999)
1600000100012110002
(26-90)
1600000100012110003
42-56
1600000100012790001
6-32
1600000100012790002
17,21
1600000100012790003
6,7,9,10
1600000100012890001
(1-5),(2-998),(9-999)
1600000100012890002
(1-47),(2-48)
1600000100013020001
1600000100013020002
3,5,7,9,(11-19),(27-37)
1600000100013040001
(2-14),41-57,61
1600000100013040002
2,35-39
1600000100013100001
420074
3-34,40-999
1600000100013100002
(2-64),(1-89)
1600000100013520001
(66-999),(91-999)
1600000100013520002
1600000100013800001
20-999
1600000100013800002
16,17-29,31
1600000100013820001
30,32
1600000100013820002
1,4
1600000100013890001
12-999
1600000100013890002
(1-7),(2-16)
1600000100013930001
(19-41),(22-28)
1600000100013930002
1-11,13 
1600000100014110001
13
1600000100014110002
,(1-23),27,29,(31-999)
1600000100014270001
25
1600000100014270002
(3-57),(8-44)
1600000100014320001
1,(2-6),(59-999),(46-998)
1600000100014320002
1-5
1600000100014400001
6-999
1600000100014400002
(114-176),(117-145)
1600000100014600001
3-38,(40-112),(57-115)
1600000100014600003
125
1600000100014600004
1,6,14,14
1600000100014740001
1,2,3,7,8,11,12,15,32/2,34,36
1600000100014740002
(16-46),(17-45)
1600000100014810001
1-15,47-999
1600000100014810002
8/38,18,21
1600000100014930001
(2-998)
1600000100014930002
1600000100015080001
(22-28)
1600000100015080002
5,10
1600000100015090001
1600000100015090002
420108
2-17
1600000100015300001
25,27
1600000100015300002
(34-50)
1600000100015320001
(2-30),(49-91)
1600000100015320002
(52-76),(97-109)
1600000100015320003
(78-998),(115-999)
1600000100015320004
(1-105),(2-88)
1600000100015330003
(1-61),(22-62)
1600000100015370001
67-101
1600000100015370002
(1-31),2
1600000100015410001
(33-65)
1600000100015410002
(1-21),(2-16)
1600000100015450001
(18-20),22-999
1600000100015450002
(31-51),(22-64)
1600000100015530001
(2-20),(1-29),(53-999),(66-998)
1600000100015530002
2,3,5-10,11,4£¨
1600000100015560001
(12-44),(13-55)
1600000100015560002
(1-39),(4-10)
1600000100015600002
(38-110),(43-109)
1600000100015600003
(24-30),36£¨
1600000100015600004
1-3,5-13,15-999
1600000100015610001
4,14
1600000100015610002
1,(2-18)
1600000100015670001
(3-999),(20-998)
1600000100015670002
1-18,25,27,27
1600000100015760001
(39-51),(52-68)
1600000100015760002
2,4,4,4,4,6,6,6,8/2
1600000100015770001
,(8-998)
1600000100015770002
(1-7),4,6,10/8
1600000100015830001
(60-82)
1600000100015830003
60,64,66
1600000100015880001
(12-50),(25-41)
1600000100015880002
(1-23),2,2,6
1600000100015880003
43,(49-69)
1600000100015880004
(1-25),(4-20)
1600000100015920001
(39-51)
1600000100015920002
5/28
1600000100015930001
(95-211),(40-154)
1600000100015930002
1,3,(7-37),(156-998),(213-999)
1600000100015930003
(2-4),(8-38),(39-41),(49-93)
1600000100015930004
1-5,7-999
1600000100016050001
1600000100016050002
(2-40),(1-43)
1600000100016200001
42,(44-998)
1600000100016200002
1,3,5,10
1600000100016210001
(2-8),12,18,14
1600000100016210002
35-47
1600000100016230001
(9-27)
1600000100016230004
50-78
1600000100016230005
1,(5-9),(13-25),(39-999)
1600000100016270001
(26-36)
1600000100016270002
1600000100016320001
1600000100016320002
(4-8),(3-15)
1600000100016420001
1,(10-998),(17-999)
1600000100016420002
(48-60)
1600000100016500001
(57-91),(74-88)
1600000100016500002
(28-38)
1600000100016500003
(9-27),7,1
1600000100016500004
(4-24)
1600000100016500005
1600000100020070001
(5-29),6,33
1600000100020070002
(1-97),(2-92)
1600000100020400001
(99-999),(94-998)
1600000100020400002
420079
(1-15),6,8,10,(22-998)
1600000100020840001
(25-35)
1600000200000010001
423812
1650
92430000000
(41-51)
1600000200000010002
423810
(53-59)
1600000200000010003
423815
(61-71)
1600000200000010004
423827
26,39
1600000200000030001
423821
38/106,40/105,(32-36),42,44
1600000200000030002
423826
49/104,45,47,53,55
1600000200000030003
423816
8,12,16,20
1600000200000030004
423825
(17-33)
1600000200000030005
423818
1600000200000030006
1,(2-14)
1600000200000040001
1600000200000040002
1600000200000060001
2,(8-28)
1600000200000060002
32/44,30
1600000200000060004
33/42,(25-31),45
1600000200000060005
423823
46/93,(34-42),48,50
1600000200000060006
(9-17)
1600000200000060007
15/21,17,19
1600000200000100001
423822
44/45,52/41,(28-32),38,40,46
1600000200000100002
423832
(8-18),(9-13)
1600000200000100003
3,5
1600000200000150001
43/43,(35-41),49,54,64,74,90
1600000200000150002
46,50
1600000200000150003
423831
7/97,1,(9-13),(17-31)
1600000200000150004
8,10,(14-28),30ª1,30ª2,30ª3,30ª4,30ª5
1600000200000150005
423809
37/15,(2-12),13-17,20-36
1600000200000160001
38,(39-49)
1600000200000160002
50/15,(40-48)
1600000200000160003
423819
52/16,68/19,(54-66)
1600000200000160004
70,72
1600000200000160005
73/21,(53-69)
1600000200000160006
87/22,93
1600000200000160007
88/20,97,99,101
1600000200000160008
90
1600000200000160009
98/23,(92-96)
1600000200000160010
(74-86)
1600000200000160011
72,110,112,118,120
1600000200000180001
157,(161-173)
1600000200000180002
129/5,(105-127)
1600000200000180003
155/7,(133-153)
1600000200000180004
51/38,53,55,65,69,116,124
1600000200000180005
84/13,(72-78),82,(86-100)
1600000200000180006
(175-183)
1600000200000180007
(75-95),97/7
1600000200000180008
(99-103)
1600000200000180009
(142-166)
1600000200000180010
4,6,12,14,16
1600000200000210001
7
1600000200000210002
1,2
1600000200000260001
3-21
1600000200000260002
23/40,49/1,(20-24),(25-47)
1600000200000270001
51/2,65/35,(26-42),(53-61)
1600000200000270002
(44-78)
1600000200000270003
79/43,(67-77)
1600000200000270004
81/30,(83-95)
1600000200000270005
86/43,(80-84)
1600000200000270006
9/26,21/33,(11-19)
1600000200000270007
(101-107)
1600000200000270008
(4-12)
1600000200000270009
17/97,(19-33)
1600000200000280001
18/99,30/116,(20-28)
1600000200000280002
1600000200000280003
1600000200000280004
18/51,22/9,20,24
1600000200000290001
1600000200000290002
5/129,(7-13)
1600000200000290003
(17-23),(26-48),33,37,41
1600000200000290004
(47-53)
1600000200000290005
(8-14)
1600000200000290006
108/5,102,106,107,(110-114)
1600000200000310001
144/53,(118-142)
1600000200000310002
32/42,40/45,63/47,65/70
1600000200000310003
50/48,(54-72)
1600000200000310004
92/43,(76-90)
1600000200000310005
35,(18-30),41
1600000200000310006
(34-38),46-48,(51-61)
1600000200000310007
(94-100)
1600000200000310008
107-118,(120-124)
1600000200000320001
136/147,119/22,135/49,136/47
1600000200000320002
18/34,23/36,(20-40),(25-49)
1600000200000320003
50/36,73/5,46,48,51-65,(67-71)
1600000200000320004
75/10,76/39,91/41,66,70,74,(77-89)
1600000200000320005
78/44,103/51,(80-86),94-102
1600000200000320006
(121-133),(128-134)
1600000200000320007
(2-16),(9-19)
1600000200000320008
1-10,12-14,17,(16-30)
1600000200000330001
11,15
1600000200000330002
1600000200000360001
1600000200000360002
2,23/98,(1-21)
1600000200000370001
4,45,51
1600000200000370002
(25-41),26
1600000200000370003
13/73,20/7,13,15,21-23,31
1600000200000410001
14/70,4,6,12,17
1600000200000410002
28/22,(30-44)
1600000200000510001
423850
(19-43)
1600000200000510002
45-56,(58-98)
1600000200000510003
423824
(33-77),91,94
1600000200000530001
93/100,(79-89)
1600000200000530002
(1-31),12,30
1600000200000530003
1600000200000600001
15-17,(21-25),39
1600000200000600002
10/48,25/21,12-32
1600000200001010001
423803
34,36,38
1600000200001010002
423806
1-10,(12-26),30,36
1600000200001020001
(11-33),35,35
1600000200001020002
10/2,(2-12)
1600000200001090001
14/15,50/11,(16-64)
1600000200001090002
41/9,(17-37)
1600000200001120001
57/7,14,14,14,(18-44),45-55
1600000200001120002
1604300100000070001
422983
1677
1652
92440000000
(1-5),(2-38)
1604300100000070002
422980
(1-67),(87-123),(2-94),(130-152)
1604300100000110001
(69-85),(96-128),(156-160)
1604300100000110002
422985
(95-141),(106-116)
1604300100000300001
(1-93),(2-104)
1604300100000300002
(65-73),(78-100)
1604300100000370001
(1-63),(2-76)
1604300100000370002
(1-55),(2-62)
1604300100000400001
(57-181),(64-182)
1604300100000400002
(3-57),(2-64)
1604300100000420001
(59-153),(66-156)
1604300100000420002
(106-190),(107-179)
1604300100000530001
(2-104),(1-105)
1604300100000530002
(1-21),(2-14),(53-67),(38-48)
1604300100000560001
(27-51),(16-34)
1604300100000560002
(2-22),(1-23)
1604300100000570001
(1-53),(2-62)
1604300100000760001
(55-95),(64-98)
1604300100000760002
(12-154),(9-155)
1604300100000890001
1604300100000890002
(1-125),(2-118)
1604300100000940001
(127-149),(120-146)
1604300100000940002
1604300100000960001
422981
(1-71),(2-38)
1604300100000980001
(40-98),(73-147)
1604300100000980002
116,
1604300100000980003
422984
2-118,121-127
1604300100001180001
(129-161),120,122,124
1604300100001180002
422986
(125-137),(112-114)
1604300100001190001
(1-123),(2-110)
1604300100001190002
(100-166),(103-127)
1604300100001210001
(2-98),(1-101)
1604300100001210002
1-4
1604300100001230001
1604300100001720001
422982
(24-112)
1604300100001720002
4¡
1604300100001800001
(2-52),(1-53)
1604300100001800002
1800000100000030001
426065
1840
1834
94401000000
(34-72),(11-21)
1800000100000030002
426068
(1-19),(18-40)
1800000100000040001
426028
1832
(21-53),(42-76)
1800000100000040002
426019
(55-93),(78-96)
1800000100000040003
426010
1-10
1800000100000070001
30-68
1800000100000070002
1,3,4,(71-123),(78-132)
1800000100000080001
(125-141),(146-216)
1800000100000080002
(149-253)
1800000100000080003
(255-355),(218-338)
1800000100000080004
426023
2-34
1800000100000110001
36-68
1800000100000110002
426006
1800000100000250001
426009
1833
94401363000
(81-201),(2-114)
1800000100000250002
426060
(126-134),213,215,(219-223)
1800000100000250003
94401385000
1-18,(25-105),(20-52),92
1800000100000260001
1800000100000260002
19,21,23,54
1800000100000260003
1841
(107-207),(54-90),(94-156)
1800000100000260004
1-73
1800000100000370001
74-98
1800000100000370002
55
1800000100000410001
426027
(47-51),52
1800000100000410002
426063
(2-50),(7-39)
1800000100000410003
426003
110-202
1800000100000420001
4-109
1800000100000420002
1800000100000460001
426050
(2-96),3,(23-25)
1800000100000460002
2,(10-20),9,13,17
1800000100000520001
24,29
1800000100000520002
426004
54-56
1800000100000520003
(41-47),(30-48)
1800000100000520004
1,(5-75),(2-54)
1800000100000580001
75,75,75
1800000100000580002
163-191,192,194
1800000100000600001
80-108
1800000100000600002
141,145,(151-165),171
1800000100000610001
(1-29),(10-40)
1800000100000610002
(102-172),(117-137),143,147,149
1800000100000610003
1800000100000630001
426053
1800000100000630002
426061
1,(180-186),200,202,272
1800000100000670001
426039
5
1800000100000670002
426030
1831
1,(7-31),5
1800000100000670003
(2-138),139
1800000100000670004
1-125
1800000100000760001
126-136
1800000100000760002
73
1800000100000800001
426051
(1-71),(2-66)
1800000100000800002
426057
(219-253),(158-166)
1800000100000800003
426000
(68-156),(75-131)
1800000100000800004
1-20,22
1800000100000910001
48
1800000100000910002
(21-49),(24-46)
1800000100000910003
1800000100000980001
1800000100000980002
1-17,83,85
1800000100000990001
18-80,(82-130)
1800000100000990002
1800000100001110001
(16-32),(15-91)
1800000100001110002
1800000100001200001
115-159
1800000100001200002
1-118
1800000100001230001
119-149
1800000100001230002
176-202
1800000100001300001
(1-19),(2-26)
1800000100001300002
426052
(19-59),(28-60),17
1800000100001440001
(3-17),(4-26)
1800000100001440002
(61-99),(62-68)
1800000100001440003
(17-53),(36-84)
1800000100001480001
(55-77),(86-122)
1800000100001480002
(23-59),(30-42)
1800000100001490001
(63-71)
1800000100001490002
1800000100001580001
426075
(2-72),1,15,17,17,19
1800000100001580002
426072
127,129,131,172
1800000100001710002
426008
(92-102),72
1800000100001710004
426001
(111-127),140
1800000100001710005
(3-15),(2-74),17
1800000100001710006
426033
(1-111),(2-106)
1800000100001720001
(113-133),(108-134)
1800000100001720002
(1-81),(48-86)
1800000100001730001
(83-105)
1800000100001730002
1800000100001800001
53,55,(44-50)
1800000100001800002
(17-51),(18-42)
1800000100001800003
144,186,192,194
1800000100001870001
214,216
1800000100001870002
(1-85),(2-96)
1800000100001870003
(165-223),(188-212)
1800000100001870004
426076
(231-279)
1800000100001870005
(281-287),279
1800000100001870006
426034
(289-379)
1800000100001870007
(218-222),224
1800000100001870009
(224-230)
1800000100001870010
1-84,86
1800000100001880001
49,51,61,(85-97),(88-92)
1800000100001880002
(1-19),(2-28)
1800000100001910001
(129-227),(144-244)
1800000100001910002
(21-123),(30-142),17
1800000100001910003
18
1800000100001970001
426021
4,(2-16),(89-121)
1800000100001970002
21-29,50,76
1800000100001990001
31-45,48
1800000100001990002
(1-45),(2-58)
1800000100002000001
(141-263),(150-288)
1800000100002000002
(47-139),(60-148)
1800000100002000003
1-18,20
1800000100002010001
54-82
1800000100002010002
319,268
1800000100002020001
(1-73),(2-98)
1800000100002020002
(133-143),(185-191)
1800000100002020003
(79-131),(106-156)
1800000100002020004
(160-172),(214-226)
1800000100002020005
211
1800000100002030001
(1-97),(2-76)
1800000100002030002
(123-139),(86-90),155,(101-105),109
1800000100002030003
(161-175),(164-182)
1800000100002030004
(257-303),(278-332)
1800000100002030005
(126-142)
1800000100002030006
(13-39),(28-32)
1800000100002050001
(12-20),11
1800000100002050002
(38-68),(74-76),(61-123)
1800000100002050003
(1-33),(2-54),68
1800000100002090001
(35-45),56
1800000100002090002
1-12,14,16
1800000100002250001
132
1800000100002250002
(13-19),(18-46)
1800000100002250003
(23-75),(48-80)
1800000100002250004
(77-89),(98-122)
1800000100002250005
(140-190),179
1800000100002250006
1800000100002250007
(1-109),(2-114)
1800000100002280001
(111-151),(116-162)
1800000100002280002
(49-59),(2-82)
1800000100002290001
(84-106),(1-7)
1800000100002290002
14,16,18,22
1800000100002330001
17,19
1800000100002330002
3,5,7,9,178
1800000100002330003
11,(24-26)
1800000100002330004
(53-69),(46-82),124
1800000100002330005
1-102,104
1800000100002350001
426035
104,105-161,163
1800000100002350002
150
1800000100002360001
169-191,214-246
1800000100002360002
4-7,9,19,28
1800000100002390001
46-48,50-52
1800000100002390002
460034
(56-76)
1800000100002390003
19-23
1800000100002420001
1800000100002420002
426056
5,5,2-4,8-10
1800000100002420003
(1-9),(6-16),32,36
1800000100002450001
(11-27),(18-22)
1800000100002450002
28,30,35,37,37,38,39
1800000100002460002
426011
(50-60)
1800000100002460003
272
1800000100002610001
(1-107),(2-126),130
1800000100002610002
(115-175),206,164,188
1800000100002610003
(208-272),(177-275)
1800000100002610004
(274-288),300,302
1800000100002610005
(393-437),428
1800000100002610006
(1-81),(2-96)
1800000100002620001
(83-137),(100-146)
1800000100002620002
1,4,5,7,10,11
1800000100002670001
(13-51),(12-46),58
1800000100002670002
20,22
1800000100002690001
426069
4,8,13,5
1800000100002690002
(22-58),(33-45)
1800000100002690003
426054
1-64,66
1800000100002730001
(165-171),(160-164)
1800000100002730002
(65-163),(68-158),170
1800000100002730003
2-28,34
1800000100002740001
36,38
1800000100002740002
(3-7),(11-95),(2-6),(10-106)
1800000100002780001
(97-189),(108-224)
1800000100002780002
1800000100002780003
1800000100002790001
1800000100002790002
1-118,120
1800000100002810001
(119-147),(124-156)
1800000100002810002
(1-61),(2-54)
1800000100002840001
(56-100),(113-149)
1800000100002840002
(1-87),(4-24)
1800000100002860001
(89-107),(32-60)
1800000100002860002
426041
51,53,(56-78)
1800000100002910001
(1-49),55,(4-52)
1800000100002910002
(15-39),(14-30),4
1800000100002980001
(32-42),55,16,18
1800000100002980002
27,(31-61),(2-62)
1800000100003080001
(5-23)
1800000100003080002
(63-79),(64-96)
1800000100003080003
1800000100003120001
(15-21),(16-48)
1800000100003120002
(1-7),(17-27)
1800000100003190002
(43-57),61
1800000100003190003
1800000100003190004
(1-33),(2-46)
1800000100003210001
(35-111),(48-106)
1800000100003210002
1800000100003220001
1800000100003220002
(1-5),(2-30)
1800000100003380001
(7-49)
1800000100003380002
(32-48)
1800000100003380003
9,11,13,19,(31-59),(2-10),(32-62),16
1800000100003390001
(61-67),(64-74),62
1800000100003390002
(1-39),(2-16)
1800000100003460001
(41-43),(82-92)
1800000100003460002
(45-59),(94-100)
1800000100003460003
2,4,4,11,3
1800000100003500001
(7-45),(6-46)
1800000100003500002
1800000100003510001
(26-34),37,39,47
1800000100003510002
20,1-18,27
1800000100003580001
(45-65),(34-100)
1800000100003580002
(22-32),(19-43)
1800000100003580003
1,30,(50-82)
1800000100003590001
90-130,140,142
1800000100003590002
36,62-82
1800000100003700001
1800000100003700002
1-116
1800000100003780001
118-128
1800000100003780002
109-165
1800000100003830001
2-108
1800000100003830002
214
1800000100003910001
426007
(155-189),(122-186)
1800000100003910002
(213-227)
1800000100003910003
(229-261),(216-278)
1800000100003910004
(7-97),99,(4-80),94,116,118
1800000100003910005
(190-200)
1800000100003910006
(202-206)
1800000100003910007
(279-365)
1800000100003910008
(280-294),(367-373),377
1800000100003910009
(199-217)
1800000100004020001
(3-109),(4-98)
1800000100004020002
200
1800000100004020003
139,(120-124)
1800000100004240001
(1-69),(4-62)
1800000100004240002
(167-189),(184-228)
1800000100004240003
61
1800000100004260001
9
1800000100004260003
(1-35),(2-46),(65-69)
1800000100004320001
(50-90),(61-63)
1800000100004320002
265,265
1800000100004340001
50,55,189
1800000100004340002
(1-109),(10-108)
1800000100004340003
(111-173),(112-158)
1800000100004340004
(177-241),(180-286)
1800000100004340005
(277-351),(290-358)
1800000100004340006
1-107
1800000100004360001
108-221,225,234
1800000100004360002
(1-73),18
1800000100004370001
(54-82),(91-99),100-189
1800000100004370002
1800000100004410001
1800000100004410002
2,8,8,10,10
1800000100004420001
22,(24-66)
1800000100004420002
(17-21)
1800000100004420003
(23-41)
1800000100004420004
(7-15),3
1800000100004420005
1800000100004420006
(3-87),(2-102)
1800000100004430001
(89-125),(106-110)
1800000100004430002
2,38-86,88
1800000100004440001
87,89-101
1800000100004440002
(3-71),(8-122)
1800000100004560001
(73-143),(124-200)
1800000100004560002
(13-61),(26-60)
1800000100004570001
(1-11),(2-24)
1800000100004570002
1800000100004610001
13-42
1800000100004610002
(1-115),(2-104)
1800000100004620001
(117-151),(106-162)
1800000100004620002
1800000100004710001
70-76
1800000100004710002
(141-155),(148-162)
1800000100004710003
2-5
1800000100004760001
(19-45),(64-94)
1800000100004760002
(7-17),(6-62)
1800000100004760003
1-4,6
1800000100004840001
5,7-29
1800000100004840002
1-82,84
1800000100005010001
(141-147)
1800000100005010002
304
1800000100005010003
34,36,45,48,51,55,56
1800000100005010004
(149-229),(212-218)
1800000100005010005
(231-237)
1800000100005010006
(247-253),(220-252),272,366
1800000100005010007
255
1800000100005010008
(261-277)
1800000100005010009
(83-103),(86-210)
1800000100005010010
(254-302)
1800000100005010011
116-140,114
1800000100005170001
5-114
1800000100005170002
5-61
1800000100005180001
69-95
1800000100005180002
(101-179),(88-172)
1800000100005190001
(5-99),(2-86),88,88
1800000100005190002
118-198
1800000100005220001
(9-115),(4-116)
1800000100005220002
(2-36),(11-47),3
1800000100005230001
(70-94)
1800000100005230002
9-59
1800000100005290001
(67-189),(170-174)
1800000100005290002
1-100
1800000100005300001
(102-160)
1800000100005300002
1-111
1800000100005310001
(113-157),(112-164)
1800000100005310002
(1-21),(2-6)
1800000100005350001
(23-61),(8-48),6
1800000100005350002
(113-127),(104-114)
1800000100005430001
(53-73),40
1800000100005430003
(2-6),36,38
1800000100005430004
(88-94)
1800000100005430005
1-13,19
1800000100005480001
15-27,35,28
1800000100005480002
(33-63),(36-72)
1800000100005480004
(37-47),(50-58),20,35,40,44
1800000100005500001
(79-97),105,(131-151)
1800000100005550001
(100-138),(162-188)
1800000100005550002
(4-98),(3-35),(49-67)
1800000100005550003
1-6
1800000100005570001
7-77
1800000100005570002
(217-273)
1800000100005620001
(9-109),(2-100),108
1800000100005620002
(110-122),106,(111-215)
1800000100005620003
1,95
1800000100005650001
101,97
1800000100005650002
(1-17),(2-10),26,28
1800000300000010001
427439
1828
94410000000
(19-29),(16-28)
1800000300000010002
427070
141,(143-233),(146-240)
1800000300000040001
427437
(1-141),(2-144)
1800000300000040002
427431
(139-185),(148-170)
1800000300000190001
(3-137),(10-146)
1800000300000190002
427433
1800000300000300001
427434
(17-127),(16-118)
1800000300000320001
(1-67),(12-80)
1800000300000420001
(69-85),(82-100)
1800000300000420002
(87-121),(102-128)
1800000300000420003
427438
37,(39-43)
1800000300000440001
(2-8),(17-37)
1800000300000440002
427436
3,4,6
1800000300000520001
7,8
1800000300000520002
(1-95),(2-96)
1800000300000580001
(97-151),(98-154)
1800000300000580002
427441
(5-73),(2-78)
1800000300000610001
(80-190),(75-183)
1800000300000610002
(149-155),(158-160)
1800000300000620001
(4-50),(27-35)
1800000300000620002
(1-41),(2-58)
1800000300000690001
427405
(43-175),(60-192)
1800000300000690002
1800000300000750001
(2-108),(85-175)
1800000300000750002
(1-41),(2-50)
1800000300000810001
(43-89),(52-104)
1800000300000810002
(91-123),(106-142)
1800000300000810003
1800000300000850001
(17-31),(22-26)
1800000300000850002
(28-32)
1800000300000850003
1-27
1800000300000870001
427072
(1-209),(2-250)
1800000300000910001
(211-303),(252-368)
1800000300000910002
(1-35),(2-38),37
1800000300000950001
(37-69),(40-82)
1800000300000950002
(71-107),(84-122)
1800000300000950003
(1-57),(2-32)
1800000300001000001
(59-189),(34-174)
1800000300001000002
1800000300001020001
(1-29),(4-6)
1800000300001020002
(1-19),(2-20)
1800000300001030001
(21-61),(22-62)
1800000300001030002
(1-139),(2-166)
1800000300001090001
(141-277),(168-246)
1800000300001090002
7,14
1800000300001100001
(11-13),(16-40)
1800000300001100002
1
1800000300001110001
(23-61),(62-104)
1800000300001110002
(7-19),(24-60)
1800000300001110003
(127-137),(162-176)
1800000300001140001
(139-201),(178-202)
1800000300001140002
427435
(29-89),(46-130)
1800000300001140003
(1-27),(2-44)
1800000300001140004
(91-125),(134-146)
1800000300001140005
(1-23),12
1800000300001210001
1800000300001210002
(1-25),(2-78)
1800000300001300001
1800000300001410001
1-43
1800000300001430001
44-63
1800000300001430002
1800000300001480001
(3-35),(2-44)
1800000300001480002
(37-41),(46-48)
1800000300001480003
1800000300001540001
1800000300001540002
(1-7),19,21,27,(2-8)
1800000300001620001
(27-55)
1800000300001620002
(9-17),(23-25),(10-28)
1800000300001620003
31,31,31,17,(33-39)
1800000300001690001
(1-31),8,10
1800000300001690002
(21-59)
1800000300001720001
(61-121)
1800000300001720002
(16-22),(28-140)
1800000300001720003
(1-37),(2-26)
1800000300001770001
(39-87),(28-50)
1800000300001770002
15,17
1800000300001800001
(1-11),(6-16)
1800000300001800002
(19-37),(22-52)
1800000300001800003
(161-167),(168-178)
1800000300001880001
(5-157),(12-166)
1800000300001880002
(83-127),(78-100)
1800000300001920001
(22-32),(19-35),(39-81)
1800000300001920002
(34-76)
1800000300001920003
(5-21)
1800000300001960001
(2-12),(23-25)
1800000300001960002
(1-45),(4-54)
1800000300002110001
(49-61),(56-64)
1800000300002110002
(159-175),(146-158)
1800000300002200001
(19-157),(10-144)
1800000300002200002
1800000300002240001
(39-61)
1800000300002240002
(63-99),(46-90)
1800000300002240003
(7-37),(16-44),14
1800000300002240004
98,(100-136)
1800000300002300001
(29-85),(34-98)
1800000300002300002
(5-27),(6-32)
1800000300002300003
(5-17),(8-18)
1800000300002360001
1800000300002360002
2 ,2¡,2¢,4 ,6 ,8 ,10 ,12-38,39 
1801100100000620001
427951
1838
1810
94220501000
39,40
1801100100000620002
427953
2-23
1801100100000680001
427950
26-93
1801100100000680002
427954
2100002300000340001
429330
2134
2123
97407000000
7-100
2100002300000340002
429334
(1-53),(2-42)
2100002300000400001
429290
(44-100),(55-99)
2100002300000400002
429294
1-38
2100002300000460001
39-100
2100002300000460002
429333
1-37
2100002300000520001
38-100
2100002300000520002
1-41
2100002300000610001
42-100
2100002300000610002
2100002300000640001
21-67
2100002300000640002
39,68-100
2100002300000640003
429282
2100002300001020001
2100002300001020002
2100002300001080001
2100002300001080002
2100002300001200001
3-100
2100002300001200002
(50-998),(55-999)
2200000100000060001
656023
2224
01401367000
(40-48),(45-53)
2200000100000060002
656010
(15-19),(4-12)
2200000100000060003
656037
(1-13),2,(14-38),(21-43)
2200000100000060004
656000
2200000100000430001
656053
2221
01401363000
(55-63)
2200000100000430002
656050
(67-129)
2200000100000430003
656039
(6-998)
2200000100000430004
2223
2222
01401364000
(75-89),(78-82)
2200000100000650002
(16-68),(27-73)
2200000100000650003
(4-14),(3-25)
2200000100000650004
(1-19),(2-18)
2200000100000730001
656036
(21-999),19 ,(20-998)
2200000100000730002
2200000100000770002
(83-89)
2200000100000770003
(3-45)
2200000100000810001
656066
(2-24),(51-59)
2200000100000810002
656057
(23-65),(42-60)
2200000100000910001
(2-18),(1-21)
2200000100000910002
20,20 
2200000100000910003
(62-998),67
2200000100000910004
(22-40)
2200000100000910005
(48-64),(7-25)
2200000100000940001
656063
01401365000
(2-46),5£
2200000100000940002
2200000100000940003
(1-129),(2-112)
2200000100000970001
656003
2225
01401370000
(114-152),(131-187)
2200000100000970002
656045
2200000100001070001
2200000100001070002
(60-96)
2200000100001070003
(37-57)
2200000100001070004
(85-177),(72-150)
2200000100001100001
656049
(152-998),(179-999)
2200000100001100002
656008
(2-68),(1-83)
2200000100001100003
656056
(1-7),(2-10)
2200000100001190001
(9-999),(12-998)
2200000100001190002
656052
1-29
2200000100001460001
(30-50),(31-55)
2200000100001460002
(52-68),(57-89)
2200000100001460003
(9-999),(18-998)
2200000100001490002
656015
(14-16),(5-7)
2200000100001490003
(4-12),(1-3)
2200000100001490004
656038
(20-26),2
2200000100001500001
(4-18),(1-15),2
2200000100001500002
656012
(17-999),(28-998)
2200000100001500004
2200000100001530001
(28-106),(31-103)
2200000100001530002
656004
(2-76),(1-133)
2200000100001650001
(78-126),(135-207)
2200000100001650002
53,(68-142)
2200000100001690001
656064
(1-51),(2-66)
2200000100001690002
656016
(1-53),(2-54),55,55
2200000100001730001
(56-70),(57-75),55
2200000100001730002
(1-151),(2-110)
2200000100001770001
(112-140),(153-167)
2200000100001770002
656002
(142-998),(169-999)
2200000100001770003
(1-185),(2-266)
2200000100001840001
(187-193),(268-270)
2200000100001840002
(1-39),(2-46)
2200000100001870001
(41-59)
2200000100001870002
(1-19),(2-30)
2200000100001900001
(21-999),(32-998)
2200000100001900002
117-999
2200000100001910001
(1-47),(2-44),46
2200000100001910002
(48-116),(51-115),46,46
2200000100001910003
(42-998),(43-999)
2200000100001940001
(17-41),(18-40)
2200000100001940002
(1-15),(2-16)
2200000100001940003
1-57
2200000100001990001
61-68
2200000100001990003
(128-146)
2200000100002070001
(1-115),(2-126)
2200000100002070002
(161-179),152
2200000100002070003
656019
(181-205),(154-164)
2200000100002070004
(209-219),168
2200000100002070005
656060
(1-121),(2-172)
2200000100002120001
(123-161),(174-256)
2200000100002120002
2200000100002180001
2200000100002180002
2200000100002180004
66
2200000100002180005
(3-35),(4-40)
2200000100002200001
(37-113),(42-124)
2200000100002200002
(1-53),(2-56)
2200000100002260001
(55-999),(58-998)
2200000100002260002
(120-998),91,118,118,118,118
2200000100002500001
656906
(2-110),(1-89),118
2200000100002500002
2200000100002620001
(57-149),(72-158)
2200000100002620002
(160-998),(153-999)
2200000100002620003
(260-266),247
2200000100002710001
656062
(1-123),(2-128)
2200000100002710002
(151-177)
2200000100002710003
(181-237),241
2200000100002710004
656054
(243-245),239,(244-258)
2200000100002710005
656044
(249-255),(268-272)
2200000100002710006
(130-150),(125-149)
2200000100002710007
(152-174)
2200000100002710008
(200-242)
2200000100002710009
656055
2200000100002730001
(1-11),(4-16)
2200000100002730002
(18-22)
2200000100002730003
(22-24)
2200000100002780001
656011
(59-69),(26-140)
2200000100002780002
(71-145)
2200000100002780003
(2-20),(1-13)
2200000100002780004
(149-999),(142-998)
2200000100002780005
(15-39)
2200000100002780006
(7-109),7,(80-112)
2200000100002870001
(2-78),(1-5)
2200000100002870002
1-380
2200000100002940001
(381-701),(382-998)
2200000100002940002
(703-737)
2200000100002940003
(739-999)
2200000100002940004
(1-51),(2-44)
2200000100003000001
(80-998),(75-999)
2200000100003000002
(1-67),(2-30)
2200000100003030001
(32-184),(69-199)
2200000100003030002
(1-9),(2-26)
2200000100003160001
(11-31),(28-44)
2200000100003160002
(33-97),(46-118)
2200000100003160003
(99-207),(120-160)
2200000100003160004
(1-51),(2-80)
2200000100003180001
(53-65)
2200000100003180002
(91-121),(122-136)
2200000100003180004
(106-120),(75-89)
2200000100003180005
(82-104)
2200000100003180006
1-51
2200000100003240002
(129-999)
2200000100003240003
(130-998)
2200000100003240004
(56-126),(63-127)
2200000100003240005
2200000100003260001
39-77
2200000100003260002
(13-47),3,3,7,9,4,6
2200000100003270001
(8-14),(49-59),16
2200000100003270003
(61-91),(16-72),14,14
2200000100003270004
(4-14),(9-23)
2200000100003330001
656043
(79-135)
2200000100003330002
656031
2200000100003330004
(1-359),(2-272)
2200000100003360001
330,(561-609)
2200000100003360002
(1-25),(2-12)
2200000100003380001
(55-109),(36-82)
2200000100003380002
(16-34),(27-49)
2200000100003380003
(1-47),(2-58)
2200000100003400001
(74-132),(93-173),91
2200000100003400002
157
2200000100003590001
2200000100003590002
(189-197)
2200000100003590003
(55-57),61
2200000100003590004
(63-85)
2200000100003590005
(87-113)
2200000100003590006
(104-124),(119-155)
2200000100003590007
(152-158),(159-187)
2200000100003590009
2200000100003590010
2200000100003590011
(44-60)
2200000100003590012
(62-72),(76-82)
2200000100003590013
(84-102)
2200000100003590014
59
2200000100003590015
656035
(115-117)
2200000100003590016
(126-150)
2200000100003590017
74
2200000100003590018
656025
(2-18),1,1
2200000100003840001
2200000100003840002
(51-75)
2200000100003840003
(72-78)
2200000100003840004
(77-81)
2200000100003840005
(107-119),(84-124)
2200000100003840006
(3-25)
2200000100003840007
(46-70)
2200000100003840010
(27-49)
2200000100003840011
(1-19),(2-24)
2200000100003880001
(23-999),(26-36)
2200000100003880002
(1-31),(2-44)
2200000100003900001
(33-999),(46-998)
2200000100003900002
(61-327),(62-250)
2200000100003920001
(252-326),(329-335)
2200000100003920002
2200000100003920003
(1-13),(2-32)
2200000100003940001
(15-999),(34-998)
2200000100003940002
(191-199),(216-218)
2200000100003960001
(1-43),(2-56)
2200000100003960002
(45-97),(58-118)
2200000100003960003
(99-189),(120-214)
2200000100003960004
(1-107),(8-110)
2200000100003980001
2200000100003980002
(137-139)
2200000100004020001
(1-27),(2-22)
2200000100004020002
(24-52),(29-65)
2200000100004020003
(54-144),(67-135)
2200000100004020004
2200000100004110001
656033
2200000100004110002
2200000100004110003
(31-171),(54-172)
2200000100004110004
2200000100004110005
(24-36),(40-52)
2200000100004110006
(1-35),(2-34)
2200000100004220001
(39-65),(50-66)
2200000100004220002
(72-76),69
2200000100004220003
(1-55),(2-76)
2200000100004260001
(137-999),(164-998)
2200000100004260002
(78-162),(57-135)
2200000100004260003
(15-29),(52-58)
2200000100004300001
(2-50),(1-13)
2200000100004300002
(60-130),(33-69)
2200000100004300003
(11-21),(36-52)
2200000100004510001
(23-41),(54-66),68,68,68
2200000100004510002
(2-34),(1-7)
2200000100004510003
(77-999),(76-999)
2200000100004510004
(209-235),(60-76),58
2200000100004530001
(253-291),251,251¢
2200000100004530002
656067
(132-154),(200-226)
2200000100004530003
(2-32),(1-45)
2200000100004530004
(78-130),(237-247),249,249¥
2200000100004530005
(49-205),(48-56),58
2200000100004530006
(1-37),(2-64)
2200000100004570002
(97-121),(76-94)
2200000100004570003
(123-205),119,194
2200000100004570004
(96-108)
2200000100004570005
(110-192)
2200000100004570006
(1-25),(2-28)
2200000100004640002
(27-123),(30-110)
2200000100004640004
(1-49),(2-36)
2200000100004680001
(83-199),(74-126),(203-205)
2200000100004680002
(164-208),201
2200000100004680003
65
2200000100004690001
(109-185)
2200000100004690002
(33-63),(67-107),(38-118)
2200000100004690006
(120-146)
2200000100004690007
(148-178)
2200000100004690008
(180-242)
2200000100004690009
(2-36),(1-31)
2200000100004690010
(248-258)
2200000100004690011
(260-268)
2200000100004690012
(1-15),(16-38),58,62,66,70,74,(80-84)
2200000100004700001
(6-14),(40-56),60,64,68,72,(76-78),86
2200000100004700002
(4-14),(1-5),(18-20),2
2200000100004810001
26,(7-27),(30-76)
2200000100004810002
(1-25),(2-30)
2200000100004820001
(27-55),(32-90)
2200000100004820002
(92-998),(57-999)
2200000100004820003
(11-33),(24-28),(38-48)
2200000100004840001
(35-999),50
2200000100004840002
(1-9),(30-36)
2200000100004840003
(103-123),(165-177),(180-228)
2200000100004860001
(21-39)
2200000100004860002
(61-81),(98-128)
2200000100004860003
656065
(83-101),(146-148)
2200000100004860004
(22-56),(41-59)
2200000100004860005
2200000100004860006
(58-96)
2200000100004860007
(125-163)
2200000100004860008
656058
2200000100004870001
(2-20),(9-23)
2200000100004870002
(21-45),(60-166)
2200000100004900001
(47-115),(170-394)
2200000100004900002
(43-93),(28-42)
2200000100004930001
(2-26),(1-35)
2200000100004930002
1-67,68,70
2200000100005120001
166-999,164
2200000100005120002
(72-162),(69-165)
2200000100005120003
(170-178),(141-171)
2200000100005130001
(81-139),(108-169)
2200000100005130002
(180-182)
2200000100005130003
(2-102),(1-77)
2200000100005130004
(28-52),(43-59)
2200000100005160002
(2-24),(5-35)
2200000100005160003
(1-21),(2-18)
2200000100005230001
(20-26),(23-59)
2200000100005230002
(1-35),(2-44)
2200000100005240001
(37-81),(46-116)
2200000100005240002
(118-998),(85-999)
2200000100005240003
(1-31),(2-30)
2200000100005260001
(128-158),(119-141)
2200000100005260002
(32-62),(35-73)
2200000100005260003
(1-63),(2-68)
2200000100005300001
(65-87),(70-96)
2200000100005300002
(89-93),(98-102)
2200000100005300003
(95-119),(104-138)
2200000100005300004
(1-45),(2-48)
2200000100005320001
(47-93),(50-86),48
2200000100005320002
2200000100005330001
(2-28),(5-37)
2200000100005330002
(30-998),(39-999)
2200000100005330003
(137-179),(184-212)
2200000100005660001
(181-237),(236-270)
2200000100005660002
(3-41),(6-22)
2200000100005660003
(43-135),(114-182)
2200000100005660004
(214-234)
2200000100005660005
1,2,(24-60)
2200000100005660006
(74-86),62,62
2200000100005660007
2
2200000100005660008
2200000100005670001
7-32
2200000100005670003
(34-36),37
2200000100005670004
2200000100005680001
(2-26),(9-59)
2200000100005680002
(28-52),(61-77)
2200000100005680003
1-28,30
2200000100005770001
29,31-56
2200000100005770002
(19-999),(46-998)
2200000100005790002
(4-34),(1-15)
2200000100005790003
2200000100005830001
(7-15)
2200000100005830002
2200000100005830003
(1-85),(2-132)
2200000100005840001
(87-147)
2200000100005840002
2200000100005840003
(1-31),(16-24)
2200000100005880001
(33-55),(30-32)
2200000100005880002
2200000100005880003
(17-35),(36-54)
2200000100005890001
2200000100005890003
(1-27),(2-28)
2200000100005920001
103
2200000100005920002
(112-130),(105-119)
2200000100005920004
(1-27),(2-38)
2200000100005930001
(31-35),(44-46)
2200000100005930002
(1-67),(4-120)
2200000100005980001
(69-99),(122-148)
2200000100005980002
2200000100006080001
(29-135),(22-102)
2200000100006080002
(1-25),(6-20)
2200000100006080003
(1-53),(2-48)
2200000100006100001
(50-70),(55-83)
2200000100006100002
1,1
2200000100006100003
(8-28),(11-41)
2200000100006110001
8,(3-9)
2200000100006110002
(1-157),(2-208)
2200000100006190001
(159-197),(210-294)
2200000100006190002
(2-28),(1-49)
2200000100006240001
(30-54),(51-133)
2200000100006240002
(56-998),(135-999)
2200000100006240003
(30-56)
2200000100006260001
(19-39),(58-78)
2200000100006260002
(11-17),(14-28)
2200000100006260003
(3-73),(2-68)
2200000100006300001
(70-998)
2200000100006300002
(1-17),(2-24)
2200000100006310001
(26-998),(19-999)
2200000100006310002
1-42,44
2200000100006410001
(43-123),(46-126)
2200000100006410002
1-8,10
2200000100006440001
(45-57),(48-64)
2200000100006440002
(12-46),(9-39)
2200000100006440003
1-46
2200000100006540001
47-85
2200000100006540002
2200000100006610001
(2-36),(15-85)
2200000100006610002
(1-57),(2-68)
2200000100006640001
(59-169),(70-136)
2200000100006640002
(1-95),(2-28)
2200000100006690001
(30-222),(97-207)
2200000100006690002
(2-62),(1-57)
2200000100006800001
(64-998),(59-999)
2200000100006800002
2200000100006830001
(102-105),(102-104)
2200000100006830002
(106-142),(107-117)
2200000100006830003
2200000100006830004
(31-999),(40-998)
2200000100006850001
(2-38),(1-29)
2200000100006850002
(5-23),(2-22)
2200000100006890001
(25-43),(36-52)
2200000100006890002
(45-51),(54-74)
2200000100006890003
(1-85),(2-54)
2200000100006900001
(109-115),(76-82)
2200000100006900002
(117-137),78,(84-146)
2200000100006900003
(56-74),(87-107)
2200000100006900004
(107-191),(104-194)
2200000100006910002
(2-38),(7-39)
2200000100006910003
6 
2200000100006930001
(55-285),(62-288)
2200000100006930002
(2-4),6,(8-34),(1-49)
2200000100006930004
2200000100007970002
(64-230),(57-251)
2200000100007970004
2200000100007980001
(35-49),(2-62)
2200000100007980002
(66-116),(51-99)
2200000100007980003
(2-52),(1-71)
2200000100008010003
2200000100008060001
2200000100008060002
2200000100008100001
(3-37),57
2200000100008100002
(14-54),(43-71)
2200000100008100003
(293-301)
2200000100008150002
(1-173),(2-62)
2200000100008150003
(166-176),(197-225)
2200000100008150004
(180-192),(227-277)
2200000100008150005
(196-210)
2200000100008150006
(212-234),(279-291)
2200000100008150007
(238-246),(303-311)
2200000100008150008
(68-164),(175-191)
2200000100008150009
(1-63),(2-70)
2200000100008190001
(65-91),(72-92)
2200000100008190002
(101-145),(118-152)
2200000100008190003
(96-114),(93-99)
2200000100008190004
(1-59),(2-36)
2200000100008230001
(38-998),(61-999)
2200000100008230002
(1-55),(2-24)
2200000400000140001
659300
2204
01405000000
2200000400000140002
659335
(101-107),(92-118)
2200000400000150001
659334
(2-90),(1-99)
2200000400000150002
659309
(1-113),(2-124)
2200000400000170001
(115-179),(126-176)
2200000400000170002
(1-51),(2-28)
2200000400000230001
(53-103),(30-76)
2200000400000230002
659323
(2-14),(9-15)
2200000400000240001
2200000400000240002
659306
(52-999),(45-999)
2200000400000240003
659333
2200000400000250001
(42-999)
2200000400000250002
659318
2200000400000310001
2200000400000310002
52
2200000400000310003
659342
2200000400000330001
60
2200000400000330002
(65-85),(82-98)
2200000400000370001
659315
(59-63),(72-76)
2200000400000370002
659305
65/1
2200000400000370003
2200000400000410001
659328
(85-185)
2200000400000410002
659311
(4-44)
2200000400000430001
(1-55)
2200000400000430002
(46-60),(57-95)
2200000400000430003
2200000400000440001
(24-998),(1-299)
2200000400000440002
(1-99),(2-52),58
2200000400000450001
(60-98),54,56
2200000400000450002
(2-56),(1-69)
2200000400000590001
(58-98),(71-99)
2200000400000590002
70,(83-139)
2200000400000630001
659330
(1-81),(2-68)
2200000400000630002
659301
(141-167)
2200000400000630003
(1-7),(10-26)
2200000400000680001
(177-233),(198-216)
2200000400000680002
(9-175),(28-196)
2200000400000680003
(140-168),(137-175)
2200000400000710001
198-999
2200000400000710002
(2-138),(192-196),(1-135),(177-195)
2200000400000710003
659325
(1-157),(2-166)
2200000400000740001
(159-201),(168-208)
2200000400000740002
(210-322),(203-321)
2200000400000740003
(1-87),(2-110)
2200000400000750001
(195-199),(198-204)
2200000400000750002
659304
(89-133),(112-176)
2200000400000750003
87
2200000400000750004
(1-29),(2-26)
2200000400000770001
(28-82),(31-83)
2200000400000770002
(84-118),(85-137)
2200000400000770003
(35-41)
2200000400000810001
(4-38)
2200000400000810002
2200000400000820001
659302
(5-33),(10-24)
2200000400000820002
659322
(1-9),(2-16)
2200000400000860001
(31-63),(32-64)
2200000400000860002
(1-27),(10-14)
2200000400001000001
(35-37),(101-145),(90-110)
2200000400001000002
(114-156)
2200000400001000003
659319
(153-169),(158-170)
2200000400001000004
659332
(2-30),
2200000400001020001
(32-80)
2200000400001020002
2200000400001140001
(18-58)
2200000400001140002
(1-29),(2-46)
2200000400001180001
(31-111),(48-998)
2200000400001180002
659303
(2-74),(3-999)
2200000400001270001
(76-999)
2200000400001270002
659326
(1-45),(8-70)
2200000400001300001
(47-141),(72-170)
2200000400001300002
2200000400001310001
(31-123)
2200000400001310002
2200000400001380001
(47-97),(50-999)
2200000400001380002
(1-11),(2-26)
2200000400001400001
(28-32),13,15
2200000400001400002
95,(56-74)
2200000400001430001
(1-93),(2-48)
2200000400001430002
(43-63),(44-70)
2200000400001480001
2200000400001480002
(2-34),(1-35)
2200000400001490001
(36-94),(37-59)
2200000400001490002
(96-148),(61-99)
2200000400001490003
(2-26),(1-23)
2200000400001510001
(25-27)
2200000400001510002
(29-99)
2200000400001510003
2200000400001580001
(9-27),(10-28)
2200000400001580002
(1-37),(2-30)
2200000400001610001
(39-93),(32-86)
2200000400001610002
(88-134),(95-145)
2200000400001610003
(166-260),(179-257)
2200000400001620001
(2-164),(1-177)
2200000400001620002
(262-328),(259-355)
2200000400001620003
(247-999),(144-999)
2200000400001650001
2200000400001650002
(62-142),(67-245)
2200000400001650003
(1-73),(2-64)
2200000400001660001
(75-147),(66-200)
2200000400001660002
(115-151)
2200000400001670001
(153-263),(214-332)
2200000400001670002
(170-212),(67-113)
2200000400001670003
(2-168),(1-65)
2200000400001670004
2200000400001690001
(39-999),37/1,37/2,
2200000400001690002
(119-121),(108-148)
2200000400001750001
(2-106),(1-103)
2200000400001750002
(9-11),(2-32)
2200000400001790001
(13-31),113,(34-82)
2200000400001790002
(87-111),(82-104)
2200000400001800001
(21-83),(10-80)
2200000400001800002
(115-147),(228-246)
2200000400001810001
(265-271),(248-268)
2200000400001810002
(1-103),(2-140)
2200000400001810003
2200000400001820001
2200000400001820002
(22-60),(33-83)
2200000400001820003
659316
(62-198),(85-199)
2200000400001820004
(1-121),(12-172)
2200000400001840001
(181-999),(232-256)
2200000400001840002
(174-230),(123-179)
2200000400001840003
2200000400001840004
(1-23),2
2200000400001870001
(25-49),(4-58)
2200000400001870002
(51-131),(60-170)
2200000400001870003
(172-186)
2200000400001870004
2200000400001910001
(21-67),(20-60)
2200000400001910002
(2-86),(1-93)
2200000400001920001
(88-98),(95-113)
2200000400001920002
(1-99),(2-78)
2200000400002010001
(101-109),(80-170)
2200000400002010002
(1-7),14
2200000400002070001
(37-125),(26-98)
2200000400002070002
(127-193),(100-126)
2200000400002070003
9,10,12
2200000400002080001
(19-67),(16-26)
2200000400002080002
75
2200000400002080003
2200000400002100001
(1-131),(58-130)
2200000400002100002
(2-56),(1-999)
2200000400002140001
(58-66)
2200000400002140002
(1-23),(2-20)
2200000400002210001
(57-63),(34-84)
2200000400002210002
(65-107),(88-134)
2200000400002210003
1-35
2200000400002270001
36-999
2200000400002270002
(59-125)
2200000400002290001
(2-52),(1-57)
2200000400002290002
(54-999)
2200000400002290003
2200000400002300001
2200000400002300002
1-14,39,40,46,(15-21),(16-20)
2200000400002320001
41-44,(25-37),(34-38)
2200000400002320002
(184-234)
2200000400002340001
(131-151)
2200000400002340002
(1-87),(2-112)
2200000400002340003
(89-129),(114-182)
2200000400002340004
(236-266)
2200000400002340005
(1-27),(2-26)
2200000400002350001
2200000400002350002
(82-208)
2200000400002350003
(1-39),(2-26)
2200000400002380001
(41-73),(28-50)
2200000400002380002
(1-13),(2-34)
2200000400002450001
(15-109),(36-94)
2200000400002450002
2200000400002500001
(23-999),
2200000400002500002
2200000400002550001
10-31
2200000400002550002
(1-69),(2-50)
2200000400002680001
(52-999),(71-999)
2200000400002680002
(49-69)
2200000400002690001
(71-81),(80-88)
2200000400002690002
(1-19),(2-34)
2200000400002760001
(25-57),(36-58)
2200000400002760002
(1-63),
2200000400002770001
(65-123)
2200000400002770002
(69-99)
2200000400002850001
(2-42),(1-27)
2200000400002850002
(44-999),(29-67)
2200000400002850003
(1-99),(12-98)
2200000400002870001
2200000400002870002
(1-57),(2-58)
2200000400002880001
(59-99),(60-98)
2200000400002880002
(1-61),(46-78)
2200000400002890001
(80-160),(63-67)
2200000400002890002
(3-999),(4-999)
2200000400002910001
1-2
2200000400002910002
2200000400002950001
28-62
2200000400002950002
2200000400002970001
27-53
2200000400002970002
2200000400003020001
(7-13)
2200000400003020002
1-15
2200000400003110001
(24-52)
2200000400003110002
(1-21),(2-20)
2200000400003140001
(197-299),(176-298)
2200000400003140002
(22-174),(23-195)
2200000400003140003
(1-51),(2-74)
2200000400003190001
(63-73)
2200000400003190002
(82-102)
2200000400003190003
(1-57),(2-46)
2200000400003200001
(59-123),(48-110)
2200000400003200002
(112-120)
2200000400003200003
(125-155)
2200000400003200004
(1-115),(2-86)
2200000400003240001
(117-123),(88-98)
2200000400003240002
(1-81),(2-120)
2200000400003250001
(83-129),(122-168)
2200000400003250002
1-47
2200000400003270001
48-72
2200000400003270002
2200000400003280001
(27-65),(58-98)
2200000400003280002
(67-157),(100-212)
2200000400003280003
(1-25),(8-56)
2200000400003280004
2200000400003330001
2200000400003330002
2200000400003340001
29,31-86
2200000400003340002
2200000400003360001
56-170
2200000400003360002
(63-129),(76-130)
2200000400003390001
(1-61),(2-74)
2200000400003390002
(181-183),174
2200000400003390003
1-7,15
2200000400003410001
9-11
2200000400003410002
1-91,92,94
2200000400003420001
93,95-167
2200000400003420002
(33-45),(40-52)
2200000400003440001
(15-31),(28-36)
2200000400003440002
(197-999),(200-300)
2200000400003500001
659321
(66-160),(105-195)
2200000400003500002
(2-64),(1-61)
2200000400003500003
(1-3),(2-42)
2200000400003530001
(9-25),(54-80)
2200000400003530002
(1-23),(2-28),30/2
2200000400003570001
(25-199),(154-198),21/1
2200000400003570002
(30-86),5/1,13
2200000400003570003
(88-120)
2200000400003570004
(7-9)
2200000400003590001
(21-25),(12-32)
2200000400003590002
(35-63),(42-70)
2200000400003730001
(1-33),(2-40)
2200000400003730002
(1-61),(2-52)
2200000400003840001
(63-91),(54-82)
2200000400003840002
(27-31),(2-30)
2200000400003890001
2200000400003890002
2200000400003900001
2200000400003900002
2200000400003910001
(9-29),(22-42)
2200000400003910002
(14-20)
2200000400003910003
(119-217),(148-272)
2200000400003930001
(1-107),(2-146)
2200000400003930002
2200000400003980001
(11-15),(2-22)
2200000400003980002
(17-83)
2200000400003980003
2200000400003980004
(1-141),(2-122)
2200000400004020001
141,(143-177),(124-144)
2200000400004020002
(179-213),(150-190)
2200000400004020003
(33-55),(52-212)
2200000400004050001
(1-31),(2-50)
2200000400004050002
(13-73),(2-84)
2200000400004060001
(81-85),(88-92)
2200000400004060002
2200000400004080001
(61-83),(56-84)
2200000400004080002
(5-25),(2-46)
2200000400004090001
(27-83),(48-112),25,46
2200000400004090002
2200000400004120001
29
2200000400004120002
(25-45),(34-50)
2200000400004170001
(15-23),(20-30)
2200000400004170002
(1-47),(2-60)
2200000400004220001
(51-113),(62-126)
2200000400004220002
(1-107),(2-92)
2200000400004230001
(109-211),(94-170)
2200000400004230002
(1-21),(2-110)
2200000400004260001
(23-79),(112-132)
2200000400004260002
1-34
2200000400004340001
35-56
2200000400004340002
2200000400004410001
10-29
2200000400004410002
(4-6)
2200000400004470001
2200000400004470002
(1-51),(2-36)
2200000400004550001
(53-999),(38-999)
2200000400004550002
18,(1-49)
2200000900000110001
658204
2209
01416000000
(68-114),(89-175)
2200000900000110002
658218
169,(181-201)
2200000900000110003
658222
(2-76),(1-89)
2200000900000180001
658206
(78-130),(91-133)
2200000900000180002
658214
(2-118),(1-93)
2200000900000520001
120,(99-127)
2200000900000520002
658208
(2-82),(1-57)
2200000900000540001
(84-130),(59-101)
2200000900000540002
(4-24),(3-35),(43-49)
2200000900000570001
658200
41,51,(26-58)
2200000900000570002
658223
(2-24),(1-15)
2200000900000600001
658213
(28-38),(25-29)
2200000900000600002
658224
2200000900000680001
658201
(6-10),(3-11)
2200000900000680002
658207
28,(14-18),(15-31)
2200000900000680003
(2-160),(1-151)
2200000900000800001
(162-198),(153-181)
2200000900000800002
658219
(2-172),(1-157)
2200000900000860001
(174-242),(159-221)
2200000900000860002
(16-20),(15-19)
2200000900000880001
658210
2200000900000880002
(2-234),(1-179)
2200000900001020001
(236-266),(181-199)
2200000900001020002
(114-130)
2200000900001040001
(148-216),(117-167)
2200000900001040002
(244-284),(225-235)
2200000900001040003
(2-14),(1-21)
2200000900001070001
(16-36)
2200000900001070002
(2-88),(1-77)
2200000900001310001
(90-142),(83-111)
2200000900001310002
(144-178),(113-145)
2200000900001310003
(258-354),(331-427)
2200000900001310004
(180-208),(147-197)
2200000900001310005
(210-250),(219-329)
2200000900001310006
(122-140),(121-167)
2200000900001360001
(76-78),(81-83)
2200000900001360002
(2-74),(1-77)
2200000900001360003
(2-106),(1-83)
2200000900001420001
(114-118),(85-111)
2200000900001420002
(111-117)
2200000900001450001
(256-316),(225-291)
2200000900001450002
(146-238),(127-173)
2200000900001450003
(20-24),(5-23)
2200000900001490001
127
2200000900001490002
(30-58),(25-69)
2200000900001490003
2200000900001570001
2200000900001570002
(9-41)
2200000900001570003
206,(168-200),(171-199)
2200000900001570004
2200000900001570005
(56-70),(43-59)
2200000900001570006
199,200,(202-204),(201-237)
2200000900001570007
658225
(222-286),(245-269)
2200000900001570008
658227
(76-166),(85-135)
2200000900001570009
2200000900001630001
(51-53)
2200000900001630002
51,(4-24),(15-49)
2200000900001630003
(2-146),(1-173)
2200000900001640001
(148-240),(175-245)
2200000900001640002
(2-52),(1-47)
2200000900001710001
(54-70),(49-67)
2200000900001710002
(72-118),(69-117)
2200000900001710003
2200000900001740001
17-88
2200000900001740002
1-12,58
2200000900001790001
(106-144),(103-143)
2200000900001790002
(1-95)
2200000900002010001
(97-129)
2200000900002010002
(2-104)
2200000900002010003
658220
2200000900002090001
(88-108),(127-159)
2200000900002090002
(8-80),(35-125)
2200000900002090003
(110-112)
2200000900002090004
(2-170),(1-163)
2200000900002120001
(172-242),(165-227)
2200000900002120002
(2-20),(13-27)
2200000900002130001
(140-178),(193-195)
2200000900002130002
(117-119)
2200000900002130003
(180-228),(225-299)
2200000900002130004
(22-84),(29-115)
2200000900002130005
(2-80),(1-83)
2200000900002190001
(82-120),(85-121)
2200000900002190002
(2-86),(1-85)
2200000900002200001
(88-128),(87-125)
2200000900002200002
(2-38),(5-39)
2200000900002220001
(42-114),(41-61)
2200000900002220002
(3-59)
2200000900002230001
(12-66),(69-71)
2200000900002230002
2200000900002260001
(4-64)
2200000900002260002
(2-224),(1-205)
2200000900002280001
(226-288),(207-261)
2200000900002280002
2200000900002360001
54
2200000900002360002
(334-410),(291-373)
2200000900002380001
231,(284-332),(233-289)
2200000900002380002
(2-106),(1-61)
2200000900002380003
(248-262),(183-231)
2200000900002380004
61,(108-158),(63-101)
2200000900002380005
(414-420),(391-427)
2200000900002380006
(160-240),(103-181)
2200000900002380007
(2-30),(1-29)
2200000900002430001
(140-194),(147-221)
2200000900002430002
(32-52),(31-51)
2200000900002430003
(2-64),(9-121)
2200000900002440001
64,(66-112),(123-169)
2200000900002440002
(2-86),(1-83)
2200000900002490001
(88-160),(103-167)
2200000900002490002
2200000900002570001
(31-35),(53-59),(111-133)
2200000900002570002
(3-23),(39-45)
2200000900002570003
(2-136),(1-107)
2200000900002600001
136,(138-200),(109-171)
2200000900002600002
1,13,19
2200000900002640001
15,43,(60-94),(21-37)
2200000900002640002
(2-30),(1-73)
2200000900002690001
2200000900002690002
2200000900002720001
(55-57)
2200000900002720002
(2-96),(1-67)
2200000900002740001
(98-164),(71-147)
2200000900002740002
(2-28),(1-33)
2200000900002760001
(32-106),(35-121)
2200000900002760002
(108-134),(123-151)
2200000900002760003
(2-24),(1-33)
2200000900002800001
(156-210),(173-227)
2200000900002800002
2200000900002800003
(30-108),(35-103)
2200000900002800004
(6-8),(1-3)
2200000900002830001
(60-62),(57-59)
2200000900002830002
2200000900002840001
2200000900002840002
(44-48),(3-49)
2200000900002840003
(26-42)
2200000900002840004
(2-54),(1-63)
2200000900002880001
63,(56-106),(65-117)
2200000900002880002
(4-30)
2200000900003010001
(32-36)
2200000900003010002
1,(2-6)
2200000900003030001
(8-56),(3-11)
2200000900003030002
41,(62-146),(21-31),(37-39)
2200000900003030003
17,19,41
2200000900003030004
658212
35,(152-158)
2200000900003030005
(6-66)
2200000900003080001
(1-3),(27-83)
2200000900003080002
2200000900003090001
5,15
2200000900003090002
(2-28),(1-19)
2200000900003130001
(32-78),(25-85)
2200000900003130002
(95-99)
2200000900003130003
(2-54),(9-51)
2200000900003330001
(58-146),(55-123)
2200000900003330002
(148-230),(125-195)
2200000900003330003
(1-277)
2200001000000330001
658823
2210
01419000000
(2-282)
2200001000000330002
2300000100000200001
350058
2311
03401370000
(161-999)
2300000100000200002
2308
03401364000
2300000100000200003
(1-161)
2300000100000720001
350000
(163-205)
2300000100000720002
2300000100000720003
(98-112)
2300000100000720004
2300000100000750001
(137-999)
2300000100000750002
2310
03401369000
(166-998)
2300000100000750003
(2-164)
2300000100000750004
(1-171)
2300000100001140001
(173-257)
2300000100001140002
(146-188)
2300000100001140003
(2-144)
2300000100001140004
2300000100001300001
(97-999)
2300000100001300002
(2-94)
2300000100001300003
(96-998)
2300000100001300004
(1-131)
2300000100001310001
(133-999)
2300000100001310002
350049
(2-234)
2300000100001310003
(236-998)
2300000100001310004
2300000100001390001
(2-52),(33-53)
2300000100001390002
(1-243)
2300000100001400001
(245-265)
2300000100001400002
(150-194)
2300000100001400003
(2-148)
2300000100001400004
2300000100001420001
2300000100001420002
2300000100001420003
(40-998)
2300000100001420004
1-65
2300000100001480001
158,163
2300000100001480002
2309
(66-156),(67-161)
2300000100001480003
(1-313)
2300000100001490001
(315-999)
2300000100001490002
(2-294)
2300000100001490003
(296-998)
2300000100001490004
(105-999)
2300000100001550001
(100-999)
2300000100001550002
(1-103),(2-98)
2300000100001550003
2300000100001590001
350063
(53-999)
2300000100001590002
2300000100001590003
(62-998)
2300000100001590004
(1-125)
2300000100001770001
(127-999)
2300000100001770002
2300000100001770003
(52-999)
2300000100001770004
(1-5),(2-102)
2300000100001800001
350011
(113-999)
2300000100001800002
2312
03401372000
(172-999)
2300000100001800003
(15-111),(104-170)
2300000100001800004
350040
2300000100001850001
2300000100001850002
(118-354)
2300000100001850003
(2-116)
2300000100001850004
2300000100002460001
(9-33)
2300000100002460002
2300000100002630001
(15-999)
2300000100002630002
350004
(136-998)
2300000100002630003
(2-134)
2300000100002630004
2300000100002660001
2300000100002660003
(72-96)
2300000100002660004
(1-227)
2300000100002670001
(229-253)
2300000100002670002
(164-196)
2300000100002670003
(2-162)
2300000100002670004
2300000100002730001
(77-999)
2300000100002730002
2300000100002730003
(74-999)
2300000100002730004
2300000100002820001
(9-999)
2300000100002820002
2300000100002820003
(8-998)
2300000100002820004
2300000100002870001
(59-101)
2300000100002870002
2300000100002870003
(46-82)
2300000100002870004
2300000100002960001
(17-91)
2300000100002960002
03401000000
2300000100002960003
(22-88)
2300000100002960004
2300000100003030001
(37-999)
2300000100003030002
(2-48)
2300000100003030003
(50-999)
2300000100003030004
2300000100003290001
350007
(25-999)
2300000100003290002
2300000100003290003
2300000100003290004
2300000100003320001
2300000100003320002
2300000100003320003
(24-999)
2300000100003320004
2300000100003360001
(9-85)
2300000100003360002
(16-88)
2300000100003360003
2300000100003360004
(1-457)
2300000100003410001
(459-999)
2300000100003410002
2300000100003410003
(1-999)
2300000100003420001
2300000100003420002
(34-998)
2300000100003420003
(1-247)
2300000100003470001
(249-269)
2300000100003470002
(148-164)
2300000100003470003
(2-146)
2300000100003470004
2300000100003480001
(27-43)
2300000100003480002
2300000100003480003
(30-44)
2300000100003480004
2300000100003630001
2300000100003630002
(126-998)
2300000100003630003
(2-124)
2300000100003630004
2300000100003900001
(47-91)
2300000100003900002
2300000100003900003
(44-96)
2300000100003900004
2300000100004040001
2300000100004040002
(8-36)
2300000100004040003
2300000100004130001
2300000100004130002
2300000100004130003
(30-50)
2300000100004130004
2300000100004320001
350001
(125-161)
2300000100004320002
(136-162)
2300000100004320003
2300000100004320004
2300000100004410001
(35-77)
2300000100004410002
2300000100004410003
2300000100004420001
(29-53)
2300000100004420002
2300000100004420003
(24-46)
2300000100004420004
2300000100004580001
2300000100004580002
(10-90)
2300000100004580003
350072
2300000100004580004
2300000100004950001
350020
(13-31)
2300000100004950002
350015
(33-999)
2300000100004950003
2300000100004950004
2300000100004950005
2300000100004980001
(66-998),(1-43)
2300000100004980002
350059
2300000100005120001
2300000100005120002
2300000100005120003
(38-998)
2300000100005120004
2300000100005140001
2300000100005140002
(60-84)
2300000100005140003
2300000100005160001
(63-999)
2300000100005160002
2300000100005160003
(54-998)
2300000100005160004
2300000100005280001
(37-97)
2300000100005280002
2300000100005280003
(44-70)
2300000100005280004
(21-81)
2300000100005340001
2300000100005340002
2300000100005340003
(26-58)
2300000100005340004
2300000100005410001
350051
2300000100005410003
2300000100005410004
2300000100005580001
(77-197)
2300000100005580002
2300000100005580003
(80-194)
2300000100005580004
(1-177)
2300000100005630001
(179-199)
2300000100005630002
(150-170)
2300000100005630003
2300000100005630004
2300000100005640001
2300000100005640002
(58-78)
2300000100005640003
2300000100006280001
2300000100006280002
2300000100006280003
(1-285)
2300000100006740001
(287-999)
2300000100006740002
(2-352)
2300000100006740003
(354-999)
2300000100006740004
2300000100006770001
(35-999)
2300000100006770002
2300000100006770003
(26-998)
2300000100006770004
2300000100007020001
350033
(85-999)
2300000100007020002
(2-342)
2300000100007020003
(1-121)
2300000100007080001
(104-120),123
2300000100007080003
(2-102)
2300000100007080004
2300000100007100001
(163-999)
2300000100007100002
350075
2300000100007100003
(2-170)
2300000100007100004
2300000100007200001
(81-999)
2300000100007200002
2300000100007200003
(36-998)
2300000100007200004
(1-147)
2300000100007280001
(149-999)
2300000100007280002
(150-998)
2300000100007280003
2300000100007280004
2300000100007460001
(31-55)
2300000100007460002
2300000100007460003
(8-20)
2300000100007460004
(1-283)
2300000100007680001
(285-307)
2300000100007680002
(178-196)
2300000100007680003
(2-176)
2300000100007680004
2300000100007690001
2300000100007690002
2300000100007690003
(26-40)
2300000100007690004
2300000100007770001
(31-35)
2300000100007770002
2300000100007770003
(40-64)
2300000100007770004
(1-97)
2300000100007790001
(99-229)
2300000100007790002
2300000100007790003
(1-265)
2300000100007890001
(267-281)
2300000100007890002
(190-214)
2300000100007890003
(2-188)
2300000100007890004
2300000100008020001
(27-999)
2300000100008020002
2300000100008020003
2300000100008020004
2300000100008030001
2300000100008030002
2300000100008080001
(3-999)
2300000100008080002
2300000100008080003
2300000100008080004
2300000100008090001
(123-999)
2300000100008090002
2300000100008090003
2300000100008090004
2300000100008200001
2300000100008200002
(2-88)
2300000100008200003
(90-998)
2300000100008200004
2300000100008370001
2300000100008370002
2300000100008370003
(24-998)
2300000100008370004
(1-139)
2300000100008380001
(124-998)
2300000100008380002
(2-122)
2300000100008380003
2300000100008520001
(35-55)
2300000100008520002
2300000100008520003
2300000100008520004
(1-179)
2300000100008530001
(181-201)
2300000100008530002
(164-184)
2300000100008530003
2300000100008530004
2300000200000250001
352913
2302
03405000000
(5-111),(124-134)
2300000200000250002
352923
2300000200000250003
352930
2300000200000330001
352910
(7-31)
2300000200000330002
352922
(1-115),(2-66)
2300000200000340001
352931
(117-153),(68-96)
2300000200000340002
352900
(155-235),(98-180)
2300000200000340003
352905
(237-249),(182-202)
2300000200000340004
352902
1-47,49,51
2300000200000350001
20/1,20/2,20/3,20/4,20/5,20/6,20/7,20/8
2300000200000350002
20/9,20/10,20/11,20/12,20/13,20/14,20/19
2300000200000350003
52-64,(66-90)
2300000200000350004
1-45,47,49
2300000200000360001
(165-215),(172-230)
2300000200000360002
352932
(51-161),(46-170)
2300000200000360003
1-88,(90-94)
2300000200000390001
(89-113),(96-120)
2300000200000390002
1-80,(82-98)
2300000200000400001
(145-285),(174-282)
2300000200000400002
(287-421),(286-384)
2300000200000400003
(427-437),(386-426)
2300000200000400004
352903
(83-143),(100-170)
2300000200000400005
1-119
2300000200000410001
352909
121-221,(223-261)
2300000200000410002
(263-327),(222-296)
2300000200000410003
352915
1-112,114
2300000200000430001
(113-173),(116-178)
2300000200000430002
1-45,(47-75)
2300000200000460001
352901
(191-253),(152-206)
2300000200000460002
(77-101),(46-70)
2300000200000460003
(72-148),(103-189)
2300000200000460004
2300000200000480001
(107-143),(208-246)
2300000200000480002
(21-105),(2-96)
2300000200000480003
(98-206)
2300000200000480004
2-23,(25-47)
2300000200000490001
(49-53),(26-122)
2300000200000490002
(57-65),(124-246)
2300000200000490003
2300000200000500001
108-174,(176-180)
2300000200000500002
1-45,(47-55)
2300000200000530001
(57-69),(48-58),(88-174)
2300000200000530002
(71-167)
2300000200000530003
1-30,(32-36)
2300000200000540001
(35-53),(42-58)
2300000200000540002
1-40,(42-54)
2300000200000550001
(41-55),(56-82)
2300000200000550002
(126-236),(83-203)
2300000200000550003
(84-124),(57-81)
2300000200000550004
1-77,(79-103)
2300000200000560001
(105-177),(78-168)
2300000200000560002
(311-427),(362-412)
2300000200000560003
(170-184),(181-307)
2300000200000560004
(186-360)
2300000200000560005
(414-448),(429-469)
2300000200000560006
1-34,(36-44)
2300000200000590001
(39-55),(46-58)
2300000200000590002
(57-205),(62-186)
2300000200000590003
1-62,(63-81)
2300000200000620001
(201-263)
2300000200000620002
(64-84),85-199
2300000200000620003
1-149,(151-157)
2300000200000640001
(150-228),(159-239)
2300000200000640002
1-61
2300000200000660001
62-86,88
2300000200000660002
352924
(187-247),(178-230)
2300000200000660003
(249-261),(232-246)
2300000200000660004
(263-413),(248-406)
2300000200000660005
(415-469),(408-466)
2300000200000660006
(471-505),(468-510)
2300000200000660007
(87-185),(90-176)
2300000200000660008
1-108,(110-124)
2300000200000710001
(109-169),(126-186)
2300000200000710002
1-55,57
2300000200000720001
(65-95),(62-138)
2300000200000720002
1-50,(51-61)
2300000200000730001
(63-91)
2300000200000730002
(1-5),(2-56)
2300000200000760001
(201-217),(246-260)
2300000200000760002
(219-413),(262-432)
2300000200000760003
(415-451),(434-492)
2300000200000760004
(453-485),(494-528)
2300000200000760005
(7-29),(31-83)
2300000200000760006
(85-199),(178-244)
2300000200000760007
(58-80)
2300000200000760008
(82-176)
2300000200000760009
1,(2-174)
2300000200000860001
(3-101),(176-198)
2300000200000860002
1-106,(107-141)
2300000200000880001
(108-172),(143-187)
2300000200000880002
(174-468),(191-475)
2300000200000880003
352919
1-60,(61-79)
2300000200000890001
(154-304),(187-319)
2300000200000890002
(62-150),(81-185)
2300000200000890003
1-90,(92-100)
2300000200000900001
(129-203),(176-294)
2300000200000900002
(207-305),(296-394)
2300000200000900003
(307-397),(402-408)
2300000200000900004
(91-127),(102-170)
2300000200000900005
1-46,(47-117)
2300000200000910001
(119-205),(48-142)
2300000200000910002
(144-152),(207-213)
2300000200000910003
14-40,42
2300000200000920001
(41-135),(44-120)
2300000200000920002
(122-178),(137-199)
2300000200000920003
(180-194),(201-213)
2300000200000920004
(196-362),(215-391)
2300000200000920005
(364-426),(393-459)
2300000200000920006
(428-462),(461-504)
2300000200000920007
283/1,283/33,283
2300000200000940001
55/2,55/26,55,91/2,91/27,91
2300000200000940002
(1-217),(2-36)
2300000200000960001
(219-329),(38-100)
2300000200000960002
(331-351)
2300000200000960003
1-104,106
2300000200000970001
(105-147),(108-158)
2300000200000970002
(149-153),(164-196)
2300000200000970003
(147-499)
2300000200000980001
(3-81),(2-48)
2300000200000980002
(83-145)
2300000200000980003
1-14,16
2300000200001000001
(125-189),(130-192)
2300000200001000002
(15-33),(18-42)
2300000200001000003
(191-205),(194-208)
2300000200001000004
(207-387),(210-370)
2300000200001000005
(35-123),(44-128)
2300000200001000006
(372-428),(389-441)
2300000200001000007
(430-462),(443-475)
2300000200001000008
(1-191),(2-24)
2300000200001060001
(203-283)
2300000200001060002
352906
2300000200001070001
(129-145)
2300000200001070002
(147-161),(70-76),90
2300000200001070003
(163-171),(102-114)
2300000200001070004
(10-68),(89-117)
2300000200001070005
(78-100)
2300000200001070006
1-116,(117-135)
2300000200001130001
(118-166),(137-179)
2300000200001130002
2300000200001170001
(57-59)
2300000200001170002
1-24,26,28
2300000200001200001
180/2,(182-256),(147-255)
2300000200001200002
25,27,29-141
2300000200001200003
257-371,(372-398)
2300000200001200004
(143-145),(142-180)
2300000200001200005
(1-47)
2300000200001250001
(155-225),(188-244)
2300000200001250002
(49-153)
2300000200001250003
2300000200001250004
(64-186)
2300000200001250005
2300000200001260001
2300000200001260002
1-95,(96-168)
2300000200001270001
(99-179)
2300000200001270002
(170-238),(181-309)
2300000200001270003
(240-242),(311-319)
2300000200001270004
1-62,(64-82)
2300000200001280001
(63-131),(84-150)
2300000200001280002
2300000200001320001
48-195,(197-225)
2300000200001320002
32-58,60
2300000200001340001
(141-199),(172-206)
2300000200001340002
(201-215),(208-210)
2300000200001340003
(391-459),(340-414)
2300000200001340004
(5-31),(2-26)
2300000200001340005
(59-139),(62-170)
2300000200001340006
(418-458),(461-499)
2300000200001340007
1-110,112
2300000200001410001
111,113-181
2300000200001410002
1-48,(49-65)
2300000200001420001
(50-104),(67-133)
2300000200001420002
1-61,(62-72)
2300000200001430001
(181-245),(192-252)
2300000200001430002
(247-259),(254-270)
2300000200001430003
(261-421),(272-444)
2300000200001430004
(423-481),(446-508)
2300000200001430005
(483-525),(510-552)
2300000200001430006
(91-179),(100-190)
2300000200001430007
(15-45),(8-72)
2300000200001450001
(215-307),(198-296)
2300000200001450002
(47-77),(74-104)
2300000200001450003
352928
(83-213),(106-196)
2300000200001450004
(1-83),(2-40)
2300000200001470001
(85-177),(76-134)
2300000200001470002
(136-160),(179-251)
2300000200001470003
(42-74)
2300000200001470004
1-27,(28-36)
2300000200001480001
(29-57),(38-102)
2300000200001480002
1-20
2300000200001500001
21-89
2300000200001500002
90-364,(365-381)
2300000200001500003
1-62,(63-73)
2300000200001510001
(75-119),(66-84)
2300000200001510002
127/1,127/2,127/3,127/4,127/5,127/11
2300000200001740001
167,185,201,211
2300000200001740002
114/1,114/13,156/1,156/17,114,156
2300000200001790001
12/1,12/15,54/1,54/10,(38-68),12
2300000200001790002
248/1,248/2,248/3,248/4,248/5,248/15,248
2300000200001790003
177/1,172/2,187/1,187/10,187,177,172
2300000200002130001
197/1,197/11,205/1,205/9,217/2,217/5,197
2300000200002130002
3-6
2300000200002130003
1-40
2300000400000020001
353290
2305
03409000000
(2-116),(1-117)
2300000400000030001
(1-143),(2-124)
2300000400000040001
(1-75),(2-56)
2300000400000050001
(1-81),(2-46)
2300000400000060001
2300000400000090001
2300000400000180001
2300000400000200001
2300000400000280001
(1-81),(2-80)
2300000400000330001
(1-43),(12-54)
2300000400000370001
2300000400000380001
1-89
2300000400000420001
1-39
2300000400000470001
1-31
2300000400000490001
1-36
2300000400000710001
1-52
2300000400000730001
(1-109),(2-130)
2300000400000740001
2300000400000750001
2300000400000780001
1-30
2300000400000800001
(1-63),(2-86)
2300000400000870001
2300000400000930001
(1-35),(2-32)
2300000400000940001
1-66
2300000400001000001
1-60
2300000400001050001
(1-25),(2-24)
2300000400001060001
(1-79),(2-68)
2300000400001070001
2300000400001090001
(1-45),(2-86)
2300000400001110001
2300000400001120001
2300000400001130001
(1-43),(2-60)
2300000400001150001
(1-15),(2-26)
2300000400001170001
2300000400001190001
(1-79),(2-90)
2300000400001210001
2300000400001220001
2300000400001240001
2300000400001250001
(1-73),(2-66)
2300000400001350001
2300000400001360001
(1-23),(2-40)
2300000400001380001
2300000400001390001
(1-37),(2-42)
2300000400001410001
(1-9),(8-60)
2300000400001430001
2300000400001450001
2300000400001490001
2300000400001510001
2300000400001570001
(1-67),(2-42)
2300000400001580001
(1-89),(2-90)
2300000400001590001
2300000400001620001
2300000400001630001
(1-23),(2-44)
2300000400001760001
2300000400001790001
(1-83),(14-84)
2300000400001820001
1-25
2300000400001900001
(1-63),(2-52)
2300000400001910001
2300000400001920001
2300000400001930001
1-147
2300000400002000001
1-74
2300000400002010001
(1-47),(2-76)
2300000400002050001
(1-17),(2-30)
2300000400002080001
2300000400002140001
2300000400002150001
1-33
2300000400002160001
(1-77),(2-92)
2300000400002180001
2300000400002190001
(1-147),(2-130)
2300000400002240001
(1-25),(2-40)
2300000400002260001
2300000400002310001
2300000400002330001
2300000400002350001
(1-51),(2-72)
2300000400002370001
2300000400002390001
(2-78),(1-67)
2300000400002410001
(1-75),(2-66)
2300000400002420001
2300000400002450001
2300000400002540001
2300000400002560001
2300000400002650001
2300000400002710001
2300000400002730001
2300000400002770001
2300000400002790001
2300000400002830001
2300000400002910001
2300000400002930001
(1-13),(2-18)
2300000400002960001
(2-230),(1-225)
2301100000700060001
353655
2361
2331
03216804001
(232-336),(227-337)
2301100000700060002
353656
(172-254),(171-259)
2301100000700100001
(2-170),(1-169)
2301100000700100002
(146-236),(105-197)
2301100000700150001
(2-144),(1-103)
2301100000700150002
(162-300),(167-285)
2301100000700220001
(2-160),(1-165)
2301100000700220002
(100-156),(85-153)
2301100000700330001
2301100000700330002
(152-240),(159-231)
2301100000700360001
(2-150),(1-157)
2301100000700360002
(130-200)
2301100000700410001
(2-128)
2301100000700410002
(104-152),(109-157)
2301100000700430001
(2-102),(1-107)
2301100000700430002
2301100000700450001
2301100000700450002
2301100001100090001
353651
03216810001
2301100001100090002
353650
(2-90),(1-63)
2301100001100100001
(92-252),(65-225)
2301100001100100002
(2-78),(1-115)
2301100001100110001
(80-256),(117-273)
2301100001100110002
(2-46),(1-31)
2301100001100130001
(48-216),(33-191)
2301100001100130002
2301100001100170001
(2-48),(5-95)
2301100001100170002
(2-96),(1-105)
2301100001100180001
(98-140),(107-175)
2301100001100180002
2301100001100230001
(42-188)
2301100001100230002
(106-276),(77-233)
2301100001100270001
(2-104),(1-75)
2301100001100270002
(2-58),(1-23)
2303500100000160001
352120
2360
03429000000
(60-84),(25-49)
2303500100000160002
352129
(2-28),(1-31)
2303500100000180001
(32-62),(33-69)
2303500100000180002
2303500100000220001
352122
(42-246),(69-241)
2303500100000220004
352125
(66-100),(69-99)
2303500100000230001
(2-64),(1-67)
2303500100000230002
(2-28),(1-25)
2303500100000240001
(30-66),(27-61)
2303500100000240002
2303500100000290001
352121
2303500100000300002
352126
(92-114),(73-99)
2303500100000470001
(116-128),(103-113)
2303500100000470002
(2-90),(1-71)
2303500100000470003
(50-272),(69-353)
2303500100000530001
(2-48),(1-67)
2303500100000530002
2303500100000590001
(2-22),(1-37)
2303500100000610001
(24-236),(39-259)
2303500100000610002
(72-82),(65-75)
2303500100000640002
(66-250),(67-235)
2303500100000760001
(2-64),(1-65)
2303500100000760003
(2-292),(2-269)
2303500100000790001
(294-446),(271-371)
2303500100000790002
352147
(64-76)
2303500100000860002
2303500100001040001
352128
2303500100001040002
(94-110),(89-103)
2303500100001070001
(2-58),(1-53)
2303500100001070002
(60-92),(55-87)
2303500100001070003
2303500100001120001
(2-78),(1-101)
2303500100001180001
(80-366),(103-465)
2303500100001180002
101
2303500100001190001
(2-116),(1-95)
2303500100001190002
2303500100001210003
(66-290),(1-219)
2303500100001210004
64,64
2303500100001210005
(86-96),(95-107)
2303500100001220001
98,100,(115-133)
2303500100001220002
2303500100001230001
(1-999)
2303500100001240001
(2-40),(1-39)
2303500100002000001
(58-60),(42-46),(41-63)
2303500100002000002
(16-18),(15-17)
2303500100002110001
1-27,(29-33)
2500000100000170001
690078
2540
05401376000
55,57,(82-90)
2500000100000170002
690002
2538
05401369000
2500000100000260001
690106
33-44
2500000100000260002
(21-27),(34-42),(46-56)
2500000100000310001
690087
58,60,62,64
2500000100000310002
2536
05401364000
6-8,55,84,152
2500000100000310003
2500000100000310004
690088
(9-31),(2-36),39,45,48
2500000100000510001
690016
2537
05401367000
2500000100000510002
690011
(72-110),101
2500000100000510003
690080
2500000100000590001
690012
7-23
2500000100000590002
690021
2500000100000600001
2500000100000600002
690035
10,12,14,16
2500000100000660001
(1-17),18-27
2500000100000660002
2500000100000700001
690109
17,(21-27)
2500000100000700002
690034
2/8,8
2500000100000800001
690077
(1-9),10-21
2500000100000800002
45/3
2500000100000970001
690054
2539
05401372000
(2-54),(1-49)
2500000100000970002
690025
1-999
2500000100001160001
2500000100001160002
101-128
2500000100001300001
5,7
2500000100001300002
(33-71),(94-100),40
2500000100001300003
28-44
2500000100001340001
690105
3,4-24,32
2500000100001340002
690069
2500000100001600001
(1-999),(2-52)
2500000100001600002
2,4,6
2500000100001660001
87,90
2500000100001660002
94,96,97,98,99,101-103
2500000100001660003
(39-47),51,59,61
2500000100001750001
(65-75),(83-87),(91-121)
2500000100001750002
690014
(123-999),(114-999)
2500000100001750003
690066
(3-37),(2-46)
2500000100001750004
(60-104)
2500000100001750005
28
2500000100001760001
690013
2-19
2500000100001760002
690005
(1-19),(2-4)
2500000100001770001
690062
(6-999)
2500000100001770002
690018
(21-999)
2500000100001770003
690048
2500000100001840001
690033
2500000100001840002
(18-998),(1-15),(19-47),(53-999)
2500000100001840003
690089
(49-51)
2500000100001840004
1-5,7-17
2500000100001880001
247-287
2500000100001880002
6,(19-51),55
2500000100001880003
(57-245),(28-230),234
2500000100001880004
2500000100001960001
2,(1-999),(8-998)
2500000100001960002
(19-25),27-62
2500000100002210001
690091
(3-15),(4-26)
2500000100002210002
1-21
2500000100002230001
(23-43),36
2500000100002230002
690017
1,3,5,7,(8-26)
2500000100002360001
2500000100002360002
2500000100002380001
18,20
2500000100002380002
690003
2,4,5,9
2500000100002580001
690037
6,(11-19)
2500000100002580002
35,37
2500000100002710001
(3-33),(4-40)
2500000100002710002
690001
(59-85)
2500000100002800001
(22-32),(21-57)
2500000100002800002
(48-80)
2500000100002800003
34
2500000100002800004
56,3,10,21,25
2500000100003030001
8,74,76,78,80,101,103,119
2500000100003030002
2500000100003240001
2500000100003240002
(53-61)
2500000100003430001
(36-78),(1-47)
2500000100003430002
(80-98),83,71,(49-51),122
2500000100003430003
4,7
2500000100003480001
2,(1-3),(6-999),(9-999)
2500000100003480002
(2-20),(1-21)
2500000100003650001
(22-60),(23-39)
2500000100003650002
2500000100003660001
05401000000
(90-148),(117-165)
2500000100003660003
(8-40)
2500000100003660005
(44-52),56,69
2500000100003660006
14,16,18,20
2500000100003670001
2-9,11,13,21
2500000100003670002
2500000100003730001
(2-40),44
2500000100003730002
42
2500000100003730003
35,37,39,41,43,45,47
2500000100003830001
53,55,55,59,61,63,65,58
2500000100003830002
2500000100003830003
2500000100003830004
2500000100003950001
5-8
2500000100003950002
(3-53)
2500000100004100001
(50-72),(55-69)
2500000100004100002
(8-46)
2500000100004100003
(3-27)
2500000100004200001
2500000100004200002
(2-998),(29-999)
2500000100004200003
2500000100004210001
(28-999)
2500000100004210002
(6-24)
2500000100004210003
2500000100004210004
(1-27),(2-14)
2500000100004420001
(29-999),(16-999)
2500000100004420002
(2-54),(1-39)
2500000100004900001
(41-59),56,58
2500000100004900002
690092
(154-164)
2500000100004920003
(82-112)
2500000100004920005
(83-179)
2500000100004920006
(114-152)
2500000100004920007
(181-209)
2500000100004920008
1-24,26
2500000100005010001
25,27,29,(30-36)
2500000100005010002
(115-999),(64-999)
2500000100005070001
(39-113),(40-62)
2500000100005070002
(3-15),(2-20)
2500000100005070003
(17-37),(22-38)
2500000100005070004
2500000100005150001
(9-999),(2-998)
2500000100005150002
690074
2500000100005340001
(37-61),(40-60)
2500000100005340002
1-32,36,38
2500000100005340003
2500000100005520001
(1-999),(2-32)
2500000100005520002
1-42
2500000100005610001
43-999
2500000100005610002
1-7,(8-14)
2500000100005780001
9,11,13,15,19,21
2500000100005780002
(30-52),18,20
2500000100005780003
2-20,21,23,25
2500000100005890001
(22-42),(27-47)
2500000100005890002
4-26,(27-41)
2500000100005910001
(36-44),(43-65)
2500000100005910002
13,19,21
2500000100006140001
2500000100006140002
2500000100006240001
(1-21),23,(2-22)
2500000100006320001
23,(25-29),(24-999)
2500000100006320002
2500000100006460001
1,(2-998),(9-999)
2500000100006460002
(1-5),(2-8)
2500000100006530001
(7-999),(9-999)
2500000100006530002
2500000100007130001
690039
(30-58),(29-57)
2500000100007130002
(107-155)
2500000100007130003
690068
(157-161)
2500000100007130004
690022
(7-27),(4-28)
2500000100007130005
(60-74)
2500000100007130006
(76-84)
2500000100007130007
690049
(88-136),150
2500000100007130008
(146-148)
2500000100007130009
40,42-72
2500000100008040001
74-92
2500000100008040002
,(84-998)
2500000100008060001
2500000100008060002
(25-49),46/50
2500000100008110001
2500000100008110002
2500000100008110003
2500000100008210001
(2-68),(23-93)
2500000100008210002
(70-112),(95-109)
2500000100008210003
(142-300),(73-215)
2500000100008350001
690024
(2-140),(1-71)
2500000100008350002
690041
(1-5),(2-28)
2500000100008380001
(7-31),(30-52)
2500000100008380002
(2-42),(1-65)
2500000100008430001
2500000100008430002
2500000100008470001
9
2500000100008470002
(1-21),(2-46)
2500000100008500001
(23-39)
2500000100008500002
(48-74)
2500000100008500003
(76-100),(41-99)
2500000100008500004
(1-31),(2-58)
2500000100008620001
(33-69),(60-124)
2500000100008620002
(2-20),55,17
2500000100008660001
(22-26),(1-45)
2500000100008660002
(15-21),(14-40)
2500000100008700001
(2-12),(1-13)
2500000100008700002
2500000100009080001
2500000100400160001
690910
05401000006
(21-89),(18-102)
2500000100400160002
690912
2-49
2500000100400230001
(51-99),(50-84)
2500000100400230002
(1-17),(2-60)
2500000100400300001
(19-173),(62-188)
2500000100400300002
(2-50),(1-63)
2500000100400440001
(52-62),(65-135)
2500000100400440002
(1-47),(2-72)
2500000100400580001
(63-73),(74-94)
2500000100400580002
(63-69),71-182
2500000200000080001
692331
2501
05403000000
1-61,(62-70)
2500000200000080002
692338
23-40
2500000200000450001
2500000200000450002
692342
35ª1,(37-49),50-132
2500000200000520001
1-27,(28-48)
2500000200000520002
692337
(29-35)
2500000200000520003
2500000200000610001
(2-50),(13-31)
2500000200000610002
(33-79),(52-80)
2500000200000610003
2500000200000800001
34-94
2500000200000800002
692343
1-14,(15-39)
2500000200000860001
(16-58),(41-81)
2500000200000860002
(60-80),(83-105)
2500000200000860003
2500000200000870001
37-108
2500000200000870002
(23-59),(48-84)
2500000200000900001
2500000200000900002
(1-21),(28-44)
2500000200000900003
1-20,(21-29),28
2500000200001010001
22,30-76
2500000200001010002
2500000200001180001
34-63
2500000200001180002
64-103
2500000200001180003
108-121
2500000200001270001
2500000200001270002
21-107
2500000200001270003
(33-39),40-173
2500000200001320001
1-19,(21-31)
2500000200001320002
(20-38)
2500000200001320003
2500000200001380001
21-78
2500000200001380002
22-50
2500000200001430001
2500000200001430002
2500000200001560001
51-131
2500000200001560002
2500000200001650001
40-153
2500000200001650002
1-36,38
2500000200001740001
37,39-120
2500000200001740002
27-40
2500000200001800001
2500000200001800002
2500000200001920001
51-173
2500000200001920002
59-77
2500000200001990001
2500000200001990002
(3-93),(2-64)
2500000400000060001
692902
2508
05414000000
(95-109),(66-76)
2500000400000060002
692906
(36-58)
2500000400000290001
692916
(3-31),(8-30)
2500000400000290002
692939
(8-14),(7-17)
2500000400000340001
692903
(2-6),(1-5)
2500000400000340002
692917
72,(43-47)
2500000400000360001
2500000400000360002
692905
2500000400000360003
(3-7),(2-8)
2500000400000420001
692913
3,(2-6)
2500000400000560001
22
2500000400000880001
2500000400000880002
2500000400000970001
692911
1,(7-23),(20-32)
2500000400000970002
692929
(22-34)
2500000400001050001
692918
2500000400001050002
692928
(28-54),(27-39)
2500000400001120001
692901
(2-24),(1-25)
2500000400001120002
2500000400001130001
(1-7),(4-6)
2500000400001130002
692919
2,2
2500000400001130003
(16-54),(17-43)
2500000400001330001
(65-165),(42-100)
2500000400001380001
692910
(1-63),(2-40)
2500000400001380002
692922
1-56
2500000400001460001
692904
122-206
2500000400001460002
208-260
2500000400001460003
(58-120)
2500000400001460004
(41-51),22
2500000400001470001
2500000400001470002
2500000400001470003
3,(7-13),23,30,32,26
2500000400001730001
20,20,18,2
2500000400001730002
2,7
2500000400001850001
692924
3,(9-43),(6-30)
2500000400001850002
692930
(3-33),(2-32)
2500000400001920001
692909
(1-49),(14-44)
2500000400001990001
2500000400001990002
2500000400002240001
(4-76)
2500000400002240002
(81-227),(80-94)
2500000400002240003
2500000400002830001
(24-32)
2500000400002830002
2500000500000590001
692853
2509
05417000000
2500000500000590002
2500000500000590003
20
2500000500000590004
24
2500000500000590005
692864
14
2500000500000590006
2500000500001050001
53ª
2500000500001050002
2500000500001050003
24ª
2500000500001050004
2500000500001590001
692856
2500000500001590002
2500000500001590003
2500000500001590004
67
2500000500001590005
692854
2500000500001590006
692852
68
2500000500001590007
88
2500000500001590008
72 
2500000500001590009
92
2500000500001590010
188
2500000500001590011
187
2500000500001590012
2500000500002300001
2500000500002300002
2500000500002300003
(67-117)
2500000800000030001
692446
2505
05407000000
(119-211),(82-86),102,108
2500000800000030002
(120-194)
2500000800000030003
(1-21),(41-61)
2500000800000030004
692441
(24-50)
2500000800000030005
(52-76)
2500000800000030006
22,(23-39),(196-206),(210-218)
2500000800000030007
692443
(213-221),222,(238-292)
2500000800000030008
(2-20),(1-15)
2500000800000470001
(17-49),24,38,22,(26-36),(40-46)
2500000800000470002
(8-36),(3-35)
2500001100000670001
692512
2511
05423000000
(45-71),(64-82)
2500001100000670002
692525
1-17,18,20
2500001100000880001
692526
(19-999),(22-999)
2500001100000880002
692510
(1-67),(2-70)
2500001100001100001
692519
(69-999),(74-999)
2500001100001100002
(1-143),(2-166)
2500001100001120001
692501
(149-999),(170-999)
2500001100001120002
(1-55),(2-32)
2500001100001300001
(61-133),(34-94)
2500001100001300002
(137-999),(96-999)
2500001100001300003
(1-31),(2-34)
2500001100001400001
(45-85),(36-120)
2500001100001400002
(124-999),(93-999)
2500001100001400003
(1-27),(2-32)
2500001100001480001
(31-999),(34-999)
2500001100001480002
(1-23),(2-24)
2500001100001680001
(31-999),26,(40-999)
2500001100001680002
(1-51),(4-32)
2500001100001770001
(53-111),(40-122)
2500001100001770002
(121-129),(130-136)
2500001100001770003
692522
1-16,18-999
2500001100001830001
2500001100001830002
692524
(4-30),(1-31)
2500001100001850001
(34-82),(37-93)
2500001100001850002
(90-124),(105-131)
2500001100001850003
692506
(1-139),(2-158)
2500001100001880001
(160-999),(143-999)
2500001100001880002
(3-21),(2-38)
2500001100001900001
(50-142),(65-169)
2500001100001900002
(144-999),(171-999)
2500001100001900003
(1-63),(2-74)
2500001100001960001
(78-999),(69-999)
2500001100001960002
(9-35),(2-36)
2500001100001980001
(38-999),(37-999)
2500001100001980002
(1-113),(2-126)
2500001100002070001
(128-136),(115-143)
2500001100002070002
(1-17),(2-32)
2500001100002080001
(19-53),(34-76)
2500001100002080002
(63-999),(80-999)
2500001100002080003
2500001100002130001
(38-90),(41-111)
2500001100002130002
2500001100002230001
2500001100002230002
(1-75),(2-72),81,83,79
2500001100002560001
7,10,(74-220),(91-221)
2500001100002560002
(224-999),(225-999)
2500001100002560003
(29-31),10,34
2500001100002640001
692509
(3-5),27,2,8,(12-42)
2500001100002640002
692515
(4-44),(5-31)
2500001100002700001
(39-93),(52-102)
2500001100002700002
(97-153),(108-180)
2500001100002700003
(1-173),(2-130)
2500001100002720001
(175-179),(132-150)
2500001100002720002
(1-13),(2-12)
2500001100002740001
692511
(14-999),(15-999)
2500001100002740002
(3-17),(4-28)
2500001100002830001
(19-999),(34-999)
2500001100002830002
(2-98),(3-35)
2500001100002980001
(43-83),(102-164)
2500001100002980002
4,35,37,39,41,50
2500001100003040001
(69-159),(72-174)
2500001100003040002
(165-999),(176-999)
2500001100003040003
(1-17),(2-36)
2500001100003100001
(40-50),112,114,124
2500001100003100002
(23-113),(60-110),(116-122)
2500001100003100003
(119-155),(132-150)
2500001100003100004
2500001100003140001
(14-42),(13-55)
2500001100003140002
2500001100003210001
(33-41)
2500001100003210002
(1-103),(2-88)
2500001100003280001
(105-999),(90-999)
2500001100003280002
(1-7),(2-4)
2500001100003410001
(8-999),(9-999)
2500001100003410002
(1-53),(2-76)
2500001100003450001
59,77,83,85
2500001100003450002
(82-999),(87-999)
2500001100003450003
(1-37),(2-4)
2500001100003470001
38-999
2500001100003470002
3,5,7,(2-30)
2500001100003620001
(44-128),(31-125)
2500001100003620002
2500001100003700001
2-999
2500001100003700002
(1-9),(6-14)
2500001100003740001
(19-103),(28-120)
2500001100003740002
3-40
2500001100003840001
2500001100003840002
(1-133),(2-90)
2500001100004060001
(108-126),141
2500001100004060002
692527
2500001200000430001
692031
2507
05411000000
2500001200000430003
692042
2,24,26,28,(30-48),31
2500001200000600001
2500001200000600016
7,9
2500001200000860001
(40-82)
2500001200000860003
3,12
2500001200001260001
2500001200001260003
692040
2500001200001560001
(34-120),33,35,35
2500001200001560002
(1-25),(2-22),(26-34)
2500001200001640001
2-74
2500001200001680001
692033
76-92
2500001200001680002
2502200000100230001
692254
2533
2532
05250000001
7-999
2502200000100230002
692252
(1-93),(2-114)
2502200000100320001
(95-999),(116-998)
2502200000100320002
692251
2502200000100350001
2502200000100350002
2502200000100440001
2502200000100440002
2600000100000020001
355042
2635
07401000000
2600000100000020002
355045
2600000100000030001
355037
(1-27),(4-16)
2600000100000030002
355040
(29-999),(18-998)
2600000100000030003
(1-185),(2-164)
2600000100000110001
355007
2636
(187-999),(166-998)
2600000100000110002
355026
(1-3),(2-16)
2600000100000280001
355017
2634
(35-999),(18-998)
2600000100000280002
355002
(1-23),(2-32)
2600000100000310001
355018
(25-999),(34-998)
2600000100000310002
355001
(1-175),(2-156)
2600000100000350001
355004
(177-999),(158-998)
2600000100000350002
355019
(1-999),(2-26)
2600000100000370001
355005
(28-998)
2600000100000370002
2600000100000610001
355000
2600000100000610002
355035
1,(5-999)
2600000100000610003
2600000100000610005
355047
(1-131),(2-130)
2600000100000640001
(133-999),(132-998)
2600000100000640002
(1-29),(2-22)
2600000100000660001
(31-999),(24-998)
2600000100000660002
(2-4),1
2600000100000680001
355008
(6-998),(3-999)
2600000100000680002
355012
(1-123),(2-188),(196-998)
2600000100000710001
(125-999),(190-194)
2600000100000710002
355044
(1-13),(19-999),(2-10),(18-998)
2600000100000870001
(15-17),(12-16)
2600000100000870002
355020
1-71
2600000100001000001
72-145
2600000100001000002
(1-49),(2-42)
2600000100001030001
355006
(51-999),(44-999)
2600000100001030002
(1-71),(2-26),30
2600000100001050001
355031
(73-999),(28-998)
2600000100001050002
2600000100001070001
43-998
2600000100001070002
(1-221)
2600000100001240001
(223-285),(196-250)
2600000100001240002
355003
(1-7),(2-26)
2600000100001300001
355029
(9-37),(28-50)
2600000100001300002
(39-45),52
2600000100001300003
(47-999),(54-998)
2600000100001300004
(1-47),(2-50)
2600000100001330001
(49-999),52
2600000100001330002
2600000100001330003
2600000100001350001
(25-999),(26-998)
2600000100001350002
(1-25),(2-16)
2600000100001390001
(27-129),(18-40)
2600000100001390002
(131-199),(42-44)
2600000100001390003
(201-223),(46-88)
2600000100001390004
(90-110)
2600000100001390005
(225-999),(112-998)
2600000100001390006
(7-999),(2-4),(12-26),(30-998)
2600000100001440001
3,5,6,8,10,28
2600000100001440002
(1-51),(2-50)
2600000100001670001
(53-999),(52-72),80,(86-92)
2600000100001670002
(94-998),(74-78),(82-84)
2600000100001670003
2600000100001680001
2600000100001680002
2600000100001710001
(39-59),(32-52)
2600000100001710002
(61-999),(54-998)
2600000100001710003
2600000100001720001
2600000100001720002
2600000100001750001
(49-999),(52-998)
2600000100001750002
(1-23),(2-22)
2600000100001800001
(25-999),(24-998)
2600000100001800002
(1-53),(2-72)
2600000100001950001
(55-999),(74-998)
2600000100001950002
(11-21),(12-42)
2600000100001980001
(23-999),42/311,(44-998)
2600000100001980002
(1-65),(2-58)
2600000100002000001
(67-999),(60-998)
2600000100002000002
2600000100002060001
74-144
2600000100002060002
(1-11),(2-18)
2600000100002120001
(20-36)
2600000100002120002
(13-999),(38-998)
2600000100002120003
(1-93),(2-140)
2600000100002130001
(95-999),(142-998)
2600000100002130002
(1-17),(2-14)
2600000100002140001
(19-999),(16-998)
2600000100002140002
(1-109),(2-74)
2600000100002170001
(111-157),(76-104)
2600000100002170002
355041
(159-999),(106-998)
2600000100002170003
(1-31),(2-28)
2600000100002200001
(33-999),(30-998)
2600000100002200002
(1-35),(2-48)
2600000100002260001
(37-999),(50-998)
2600000100002260002
2600000100002270001
2600000100002270002
2600000100002270003
(1-7),(31-999),(4-998)
2600000100002270004
2600000100002320001
2600000100002320002
(56-94)
2600000100002320003
2600000100002320004
(43-57)
2600000100002320005
2600000100002320006
(2-32),1
2600000100002390001
(1-131),(34-206)
2600000100002390003
(133-215),(208-290)
2600000100002390004
(217-261),(292-318)
2600000100002390005
(263-359),(320-398)
2600000100002390006
361
2600000100002390007
(293-999),(328-998)
2600000100002390008
(1-77),(2-74)
2600000100002420001
(79-151),(155-177),(181-183)
2600000100002420003
(76-162)
2600000100002420004
153,179
2600000100002420005
(185-209),(164-208)
2600000100002420006
(211-337),(210-998)
2600000100002420007
(1-29),(2-14)
2600000100002510001
(16-42)
2600000100002510002
2600000100002510003
(57-93),(44-66)
2600000100002510004
(95-999),(68-998)
2600000100002510005
(1-79),(2-82)
2600000100002530001
(81-999),(84-998)
2600000100002530002
2600000100002590001
(27-999),(30-998)
2600000100002590002
2600000100002620001
2600000100002620002
2600000100002620003
(1-61),(2-92)
2600000100002650001
(63-111),(96-142)
2600000100002650002
(113-999),(144-998)
2600000100002650003
(1-51),(2-68)
2600000100002680001
(53-999),(70-998)
2600000100002680002
(1-93),(2-68)
2600000100002790001
(365-407)
2600000100002790002
(95-247),(70-218)
2600000100002790003
(249-277),(220-242)
2600000100002790004
(279-297)
2600000100002790005
(299-357),(244-298),(302-310)
2600000100002790006
300
2600000100002790007
(359-363)
2600000100002790008
(312-334)
2600000100002790009
(336-424)
2600000100002790010
(409-999),426ª2,(426-998)
2600000100002790011
(1-91),(2-128)
2600000100002820001
(93-999),(130-998)
2600000100002820002
(1-39),(2-60)
2600000100002840001
(41-999),(62-998)
2600000100002840002
2600000100002850001
(1-999),(2-18),(22-998)
2600000100002850002
2-62
2600000100003000001
63-165
2600000100003000002
2600000100003030001
(93-187),(78-162)
2600000100003030002
(39-91),(32-76)
2600000100003030003
(189-999),(164-998)
2600000100003030004
(3-999),1,4
2600000100003050001
2600000100003050002
2600000100003070001
(29-999),(30-998)
2600000100003070002
41
2600000100003140001
1-40,42-999
2600000100003140002
2600000100003150001
2600000100003150002
(13-47),(6-30),2
2600000100003190001
(49-999),(32-998)
2600000100003190002
(1-231),(2-180)
2600000100003200001
(233-999),(182-998)
2600000100003200002
2600000100003280001
61-998
2600000100003280002
(1-107),(2-110)
2600000100003330001
(109-999),(112-998)
2600000100003330002
(1-25),(2-8)
2600000100003440001
(27-999),(10-998)
2600000100003440002
(1-999),(2-16),(52-998)
2600000100003550001
(18-24)
2600000100003550002
(26-50)
2600000100003550003
(1-183),(2-96)
2600000100003560001
(185-999),(98-998)
2600000100003560002
2600000100003630001
(15-999),(12-998)
2600000100003630002
(1-29),(2-48)
2600000100003650001
(31-171),(50-136)
2600000100003650002
(601-611)
2600000100003650003
(1-5),(2-44)
2600000100003700001
5ª1,(7-133),(46-174)
2600000100003700002
(135-999),(176-998)
2600000100003700003
(1-27),(2-16)
2600000100003710001
2600000100003710002
(1-139),(2-124)
2600000100003770001
(141-999),(126-998)
2600000100003770002
2600000100003900001
2600000100003900002
(1-9),(2-6)
2600000100003920002
(11-59),(8-36)
2600000100003920003
2600000100003920004
(61-999)
2600000100003920005
(1-105),(2-100)
2600000100004010001
(107-999),(102-998)
2600000100004010002
2600000100004030001
(23-999),(2-998)
2600000100004030002
2600000100004090001
(23-999),(48-998)
2600000100004090002
2600000100004120001
(2-118),(122-998),
2600000100004120002
2600000100004200001
(2-24),(28-998),
2600000100004200002
(1-17),(2-22)
2600000100004240001
(19-95),(24-120)
2600000100004240002
(97-131),(122-188)
2600000100004240003
(133-307),(190-318)
2600000100004240004
(309-999),(320-998),307ª1,318ª1
2600000100004240005
355016
(1-117),(2-78)
2600000100004280001
(119-999),(80-998)
2600000100004280002
2600000100004330001
355030
2600000100004330002
(115-171),(114-168)
2600000100004380001
(1-53),(2-40)
2600000100004380002
(173-275),(170-270)
2600000100004380003
(277-345),(272-302)
2600000100004380004
(347-479),(304-422)
2600000100004380005
(481-999),(424-998)
2600000100004380006
(55-113),(42-112)
2600000100004380007
2600000100004540001
27-998
2600000100004540002
2600000100004550001
(13-999),(2-998)
2600000100004550002
2600000100004620001
(23-161),(22-166)
2600000100004620002
(163-999),(168-998)
2600000100004620003
2600000100004660001
2600000100004660002
2600000100004690001
(146-212),(149-221)
2600000100004690002
(91-147),(92-144)
2600000100004690003
(214-998),(223-999)
2600000100004690004
2600000100004780001
30-999
2600000100004780002
(1-23),(2-12)
2600000100004820001
(25-999),(14-998)
2600000100004820002
(1-999),8
2600000100004840001
2600000100004840002
2600000100005100001
21-998
2600000100005100002
2600000100005170001
2600000100005170002
(1-11),(2-14)
2600000100005180001
(13-999),(16-998)
2600000100005180002
(1-15),(2-106),(114-998)
2600000100005260001
(17-999),(108-112)
2600000100005260002
(1-49),(2-38)
2600000100005390001
(51-111),(40-88)
2600000100005390002
(113-999),(90-998)
2600000100005390003
(1-39),43ª1,(2-108)
2600000100005470001
(41-999),(110-998)
2600000100005470002
2600000100005480001
(1-999),(44-998)
2600000100005480002
(1-17),(2-20)
2600000200000230001
357600
2650
07410000000
2600000200000230002
357635
(1-41),(2-62),(81-999),(94-999)
2600000200000260001
(43-79),(64-92)
2600000200000260002
357633
(1-161),(2-94)
2600000200000450001
(163-999),(96-999)
2600000200000450002
(1-7),2
2600000200000630001
(9-999),(4-999)
2600000200000630002
2600000200000780001
(33-999),(30-999)
2600000200000780002
2600000200000790001
(17-999),(2-999)
2600000200000790002
1-122
2600000200000880001
123-999
2600000200000880002
(105-999),(86-999)
2600000200000920001
(1-101),(2-84)
2600000200000920002
(1-73),(2-28)
2600000200000940001
(75-999),(30-999)
2600000200000940002
(1-53),(2-44)
2600000200001070001
(55-999),(46-999)
2600000200001070002
1-70
2600000200001110001
71-999
2600000200001110002
2600000200001150001
11-999
2600000200001150002
2600000200001350001
2600000200001350002
(1-85),(2-86)
2600000200001580001
(87-365),(88-318)
2600000200001580002
(367-411),(320-999)
2600000200001580003
(413-481)
2600000200001580004
357625
1,(30-46),85,99
2600000200001660001
2-29,(31-45),47-84,86-98,100-999
2600000200001660002
(1-55),(2-68)
2600000200001680001
(57-999),(70-999)
2600000200001680002
(1-117),(2-114)
2600000200001930001
(119-999),(116-999)
2600000200001930002
8-999
2600000600000010001
357100
2648
07424000000
2600000600000010002
357118
4-14
2600000600000030001
357108
2600000600000040001
357111
21-30
2600000600000040002
357112
2600000600000070001
2600000600000070002
2600000600000090001
17-999
2600000600000090002
357106
2600000600000150001
2600000600000150002
2600000600000160001
(242-368),(289-301),(305-347)
2600000600000310001
357115
(2-240),(1-287),303
2600000600000310002
2600000600000320001
1,3-999
2600000600000320002
(23-37)
2600000600000350001
(147-221),(152-220)
2600000600000350002
(49-150),(39-145)
2600000600000350003
(1-21),(2-48)
2600000600000350004
(15-65),(42-999)
2600000600000510001
(9-13),(2-40)
2600000600000510002
(3-11),(2-60),73
2600000600000530001
61-72,76
2600000600000530002
(17-77)
2600000600000830001
(24-82)
2600000600000830002
(155-225),(104-168),174
2600000600000860001
(1-149),(24-94)
2600000600000860002
1-176,178-999
2600000600000900001
177
2600000600000900002
(106-160),(95-105)
2600000600000930001
2600000600000930002
(96-104),(97-159)
2600000600000990001
(1-95),(2-94)
2600000600000990002
2-8
2600000600001020001
(102-148),(139-185)
2600000600001130001
(3-137),(30-100)
2600000600001130002
1-47,52
2600000600001160001
91-111
2600000600001160002
(36-68),(15-77)
2600000600001300001
(1-9),(8-34)
2600000600001300002
2600000600001320001
357114
2600000600001320002
2600000600001340001
357117
2600000600001340002
357113
(1-95),(2-86)
2600000600001450001
(88-164),(99-149)
2600000600001450002
21,22,28
2600000600001490001
(9-19),(2-16)
2600000600001500001
2600000600001530001
2600000600001530002
2600000600001530003
16-66
2600000600001730001
2600000600001730002
(4-12),(5-7)
2600000600002010001
2600000600002010002
2600000600002010003
108-170,(69-105)
2600000600002130001
(1-67),(2-106)
2600000600002130002
(1-35),(2-46)
2600000600002210001
(37-999),(48-999)
2600000600002210002
(248-272),(157-163)
2600000600002340001
(2-246),(1-155)
2600000600002340002
9 
2600000600002440001
2600000600002440002
10-999
2600000600002440003
(2-176),(1-137)
2600000600002580001
(178-184),(139-143)
2600000600002580002
2600000900000050001
357820
2625
07407000000
(2-58),(25-37)
2600000900000050002
357825
(60-92),(41-71)
2600000900000050003
357826
(1-121),(2-82)
2600000900000130001
(123-163),(84-142)
2600000900000130002
(1-135),(2-118)
2600000900000190001
(120-142),(137-207)
2600000900000190002
(1-27),(2-30)
2600000900000200001
(29-999),(32-999)
2600000900000200002
357823
(2-54),(1-69)
2600000900000260001
(56-186),(71-231)
2600000900000260002
(188-236),(233-285)
2600000900000260003
(287-999),238,240
2600000900000260004
357831
(246-999)
2600000900000260005
357830
2600000900000280001
(64-72)
2600000900000280002
1-78
2600000900000290001
79-999
2600000900000290002
(1-131),(2-128)
2600000900000340001
(130-999),(133-999)
2600000900000340002
2600000900000430001
72-999
2600000900000430002
1,2,4-999
2600000900000460001
357821
2600000900000460002
2600000900000500001
2600000900000500002
(1-53),(2-999)
2600000900000530001
(61-69)
2600000900000530002
2600000900000690001
(79-97),(80-126)
2600000900000690002
(101-121),(128-999)
2600000900000690003
357827
2600000900000690004
(1-25),(2-34)
2600000900000750001
(27-999),(36-999)
2600000900000750002
(1-61),(2-64)
2600000900000780001
(63-999),(66-999)
2600000900000780002
(1-67),(2-74)
2600000900000810001
(69-999),(76-999)
2600000900000810002
(1-125),(2-138)
2600000900000870001
(127-999),(140-999)
2600000900000870002
2600000900000930001
2600000900000930002
(1-41),(2-6)
2600000900000950001
(43-209),(8-218)
2600000900000950002
(220-999),(211-999)
2600000900000950003
(1-79),(2-70)
2600000900001050001
(81-999),(72-999)
2600000900001050002
2600000900001090001
2600000900001090002
(1-99),(2-124)
2600000900001120001
(101-999),(126-999)
2600000900001120002
2600000900001390001
61-999
2600000900001390002
(2-72),(1-85)
2600000900001750001
2600000900001840001
11-25
2600000900001840002
27-43
2600000900001840003
(1-73),(2-68)
2600000900001870001
(75-999),(70-999)
2600000900001870002
2600000900001970001
(11-25),(14-26)
2600000900001970002
2600000900001970003
(1-39),(2-28)
2600000900002010001
(41-65),(30-64)
2600000900002010002
1,(2-12)
2600000900002050001
(3-999),(14-999)
2600000900002050002
(1-39),(2-18)
2600000900002060001
(41-999),(20-999)
2600000900002060002
2600000900002120001
(65-999),(70-999)
2600000900002120002
(1-35),(2-52)
2600000900002130001
(37-999),(54-999)
2600000900002130002
2600000900002150001
58-999
2600000900002150002
(1-99),(2-82)
2600000900002170001
(101-999),(84-999)
2600000900002170002
2600000900002190001
41,43,(20-28)
2600000900002190002
(45-77),(30-62)
2600000900002190003
2600000900002240001
74-999
2600000900002240002
1-62
2600000900002250001
63-999
2600000900002250002
(1-97),(2-102)
2600000900002260001
(99-137),(104-148)
2600000900002260002
2602500000100020001
356170
2645
2621
07254804000
(35-81)
2602500000100020002
2602500000100020003
356172
2602500000100020004
(66-142)
2602500000100040001
(9-77)
2602500000100040002
(2-64),68,(1-7)
2602500000100040003
(62-94),(61-95)
2602500000100080001
356171
(1-59),(2-60)
2602500000100080002
2602500000100110001
(32-40),13
2602500000100110002
(16-66),(37-95)
2602500000100250001
(1-35),(2-14)
2602500000100250002
(32-50),(31-49)
2602500000100280001
2602500000100280002
(125-189),(116-198)
2602500000100300001
(1-123),(2-114)
2602500000100300002
(1-99),(2-130)
2602500000100310001
(132-194),99/9,(101-149)
2602500000100310002
(1-73),(2-62)
2602500000100320001
(64-318),(75-359)
2602500000100320002
28/2,(30-56),(37-75)
2602500000100330001
(1-35),(2-26)
2602500000100330002
(1-75),(2-76)
2602500000100390001
(78-112),(77-113)
2602500000100390002
(70-106),(53-65)
2602500000100400001
2602500000100400002
(2-170),(1-47)
2602500000100470001
356173
(172-192),(49-73)
2602500000100470002
(35-117),(38-86)
2602500000100480001
(2-36),(1-33)
2602500000100480002
(92-152),(79-117)
2602500000100600001
(2-90),(1-77)
2602500000100600002
(1-33),(2-34)
2602500000100700001
(36-46),(35-45)
2602500000100700002
2602500000100720001
(20-38),(23-39)
2602500000100720002
(39-63),(42-76)
2602500000100730001
(1-37),(2-40)
2602500000100730002
(30-72),(27-91)
2602500000100830001
2602500000100830002
2602500000200040001
356190
07254802001
2602500000200040002
(17-47)
2602500000200040003
356192
(70-96)
2602500000200040004
2602500000200160001
(13-49)
2602500000200160002
2602500000200160003
356191
2602500000200160004
(1-127)
2602500000200190001
(2-184)
2602500000200190002
(129-183)
2602500000200190003
(186-258)
2602500000200190004
(1-105)
2602500000200210001
(2-136)
2602500000200210002
(107-197)
2602500000200210003
(138-234)
2602500000200210004
2602500000200290001
2602500000200290002
(13-41)
2602500000200290003
(44-76)
2602500000200290004
(86-206),(75-231)
2602500000700020001
356182
07254816001
(2-84),(1-73)
2602500000700020002
356180
(2-50),(1-73)
2602500000700050001
(54-82),(75-111)
2602500000700050002
(2-60),(1-51)
2602500000700070001
(62-96),(53-71)
2602500000700070002
(2-94),(1-99)
2602500000700090001
(96-298),(101-301)
2602500000700090002
356181
(2-80),(1-73)
2602500000700110001
(82-128),(75-135)
2602500000700110002
(2-12),(1-25)
2602500000700140001
(14-24),(27-35)
2602500000700140002
(2-18),(1-13)
2602500000700200001
(20-28),(15-33)
2602500000700200002
(2-96),(1-89)
2602500000700220001
(98-206),(91-143)
2602500000700220002
(2-52),(1-43)
2602500000700240001
(54-92),(45-65)
2602500000700240002
(2-16),(1-19)
2602500000700300001
(18-134),(24-125)
2602500000700300002
(2-70),(1-67)
2602500000700330001
(72-92),(69-85)
2602500000700330002
2700000100000280001
680028
2722
08401368000
(19-33)
2700000100000280002
680038
2700000100000280003
680021
(57-63),(58-66)
2700000100000280004
2724
08401363000
2700000100000280005
680000
2721
08401375000
(16-68),(15-999)
2700000100000450001
680026
08401371000
(2-14),(1-13)
2700000100000450002
1-97
2700000100000690001
680023
(1-31),(2-38)
2700000100001260001
680033
(33-999),(40-998)
2700000100001260002
680018
(10-44),(21-67)
2700000100001380002
3,5,(24-70)
2700000100001400001
680040
2723
08401365000
2700000100001420001
32,38,50,73,74,80,82,83,87,95,95,97
2700000100001480001
680030
(114-140),(115-149)
2700000100001480003
(142-176),(151-167)
2700000100001480004
(178-190),(175-185)
2700000100001480005
(76-86)
2700000100001710002
2700000100001840001
33-999
2700000100001840002
680011
(2-16),(5-31)
2700000100001840003
(1-19),23,(2-30)
2700000100002190001
(25-999),(34-999)
2700000100002190002
3,3,9,10,10,11,11,11,11,13,14,18
2700000100002200001
680020
(1-77),(2-62)
2700000100002210001
(66-78),(79-89)
2700000100002210002
2700000100002220001
2700000100002220002
1-96
2700000100002660001
124
2700000100002660002
(97-135),(100-122)
2700000100002660003
(126-136),137-999
2700000100002660004
(1-13),(2-8)
2700000100002820001
(12-999),(15-999)
2700000100002820002
(5-59),(2-64)
2700000100003020001
(61-89),(68-102)
2700000100003020002
(1-83),(10-98)
2700000100003220001
(87-135),(106-150)
2700000100003220002
(100-104)
2700000100003220003
(152-999)
2700000100003220004
2700000100003370001
2700000100003370002
(1-65),(2-38)
2700000100003510001
(79-83),(40-46)
2700000100003510002
(1-97),(2-104)
2700000100003730001
(99-109),(114-122)
2700000100003730002
(106-112)
2700000100003730003
3-38
2700000100004440001
680013
(41-99),(42-62)
2700000100004440002
2700000100004780001
53,58
2700000100004780002
2700000100004780003
(23-51),(55-91),(34-52),(60-88)
2700000100004780004
2700000100004780005
2700000100005060001
(39-999),(42-998)
2700000100005060002
2700000100005660001
2700000100005660002
(51-79),(76-84)
2700000100005680003
(91-111)
2700000100005680005
(14-74),(81-89)
2700000100005680006
2700000100005680007
64-78
2700000100005860001
2700000100005860002
2700000100006290001
2700000100006290002
(1-47),(2-44)
2700000100006410001
(49-999),(46-998)
2700000100006410002
(18-24),(23-29)
2700000100006480001
(2-16),(1-21)
2700000100006480002
2700000100006630001
680003
40-48
2700000100006630002
50,52
2700000100006630003
680007
(1-37),(2-44)
2700000100007480001
(41-999),(46-998)
2700000100007480002
(1-39),(2-66)
2700000100007640001
(41-999),(68-998)
2700000100007640002
,(2-20)
2700000100007730001
680042
2700000100007730002
(45-55),(88-100)
2700000100008030001
(1-11),(2-30)
2700000100008030002
(13-35),(32-60)
2700000100008030003
(37-43),(62-80)
2700000100008030004
2700000100008080001
(1-33),(2-14)
2700000100008390001
(35-53),(16-48)
2700000100008390002
180,182,(165-201)
2700000100008790001
680054
(132-134),(139-163)
2700000100008790002
2700000100008790003
680035
(170-178),(184-998),(203-999),164
2700000100008790004
(2-40),(1-67)
2700000100008790005
(42-72),(69-113)
2700000100008790006
(74-130),(121-137)
2700000100008790007
(5-69),(4-90)
2700000100009040001
(71-79),(94-108)
2700000100009040002
2700000100009260001
(7-41)
2700000100009260002
(6-28)
2700000100009260003
20,22-999
2700000100009410001
2700000100009410002
3-76
2700000100009460001
132,134,136-999
2700000100009460002
(85-135),(88-130)
2700000100009460003
2700000100009640001
(17-999),(18-998)
2700000100009640002
(1-37),(2-48)
2700000100009760001
(39-999),(50-998)
2700000100009760002
2700000100009950001
(1-7),(2-6)
2700000100009950002
(73-85)
2700000100010090001
(1-69),(2-120)
2700000100010090002
1-28
2700000100010100001
(125-137),(108-116)
2700000100010100002
(55-123),(44-104)
2700000100010100003
2700000100010430001
(17-999),(16-998)
2700000100010430002
2700000100010460001
91,93
2700000100010460002
(7-89),(24-78)
2700000100010460003
(2-22),(1-5)
2700000100010460004
(49-63),(56-98)
2700000100011310001
(89-109),(106-114)
2700000100011310002
680009
2,2,4,4
2700000100014150001
680031
22-37
2700000500000620001
681013
2703
08409000000
39-56
2700000500000620002
681010
62-83
2700000500000620003
681032
87-95
2700000500000620004
681035
2700000500000640001
681017
101,103
2700000500000640002
17-24
2700000500000710001
35-43
2700000500000710002
4-24
2700000500000910001
681016
38-42
2700000500000910002
681003
46-54
2700000500000910003
24,28,31,33-37,39-41,23,26
2700000500000920001
32,38
2700000500000920002
27-45
2700000500001090001
681007
49-85
2700000500001090002
681008
2-8,11,29-31,27
2700000500001220001
10-26,33-59
2700000500001220002
681024
1-5,7-15
2700000500001260001
681022
6,17
2700000500001260002
681018
20,22,24,27-41
2700000500001260003
681014
2-15
2700000500001360001
16-55
2700000500001360002
681000
65-79
2700000500001360003
681027
(2-20),(7-35)
2700000500001480001
(37-53),(32-50)
2700000500001480002
681021
58-79
2700000500001480003
82-84
2700000500001480004
(24-66),(1-59)
2700000500001490001
75,77,79,78,172
2700000500001490002
(174-252),(93-109)
2700000500001490003
(3-15),(6-14)
2700000500001560001
2,4,6/2,8/2
2700000500001560002
(11-29),(14-20)
2700000500001610001
2700000500001610002
2700000500001790001
19,23,25,73-77,104-114
2700000500001790002
34-64,78,79,80,86
2700000500001790003
(2-14),(3-7),1,11
2700000500001800001
18-40,48,(9-12),13,15
2700000500001800002
41-47
2700000500001800003
50-60
2700000500001800004
72-92
2700000500001800005
20-36,38-46
2700000500001810001
2700000500001810002
681029
48-54
2700000500001810003
55-76
2700000500001810004
77-103
2700000500001810005
18-59
2700000500001910001
61-131
2700000500001910002
13-17
2700000500001980001
21-29
2700000500001980002
31-49
2700000500001980003
8-13,3,5,7
2700000500002100001
14-42
2700000500002100002
43-49,51-63
2700000500002100003
50
2700000500002100004
23-96
2700000500002110001
98-190
2700000500002110002
2700000500002140001
24-26
2700000500002140002
6-10
2700000500002160001
5,14-29,35-119
2700000500002160002
30-34,169
2700000500002160003
(3-21)
2700000500002390001
46-50
2700000500002390002
5,7,13,17,19
2700000500002400001
1-4,6,8-12,14,42
2700000500002400002
39-41,43-69
2700000500002400003
2700000500002510001
1-7,9-15
2700000500002510002
2700000500002540001
2700000500002540002
2700000500002540003
19,21,22
2700000500002540004
31-43
2700000500002540005
4-16
2700000500002590001
17-59,68
2700000500002590002
63-67,69-86,88
2700000500002590003
2700000500002600001
15-27
2700000500002600002
34-36
2700000500002600003
20-30,61-65
2700000500002630001
10,33-41
2700000500002630002
42-44,67-75
2700000500002630003
2-29
2700000500003230001
34-62
2700000500003230002
2700000500003240001
681005
28-168
2700000500003240002
681034
2700000500003320001
15-23
2700000500003320002
24-39
2700000500003320003
2700000500003380001
27-64
2700000500003380002
2700000500003690001
47-57,58,60,62
2700000500003690002
59,64,66
2700000500003690003
7-37
2700000500003840001
43-51
2700000500003840002
1,3,4
2700000500003870001
7-18
2700000500003870002
2700000500004180001
14,16
2700000500004180002
(3-75),(2-68)
2800000300000020001
676852
2804
10410000000
(81-137),(70-98),106
2800000300000020002
676854
(29-119),(56-132)
2800000300000150001
676859
(1-27),(2-46)
2800000300000150002
676862
2800000300000280001
676855
(19-69),(26-74)
2800000300000280002
676856
(1-87),(2-86)
2800000300000320001
(91-137),(88-130)
2800000300000320002
(1-205),(2-190)
2800000300000670001
676850
(207-253),(192-296),298/1,298/2,298/3
2800000300000670002
(255-283),(298-328)
2800000300000670003
676863
(1-99),(4-116)
2800000300001070001
(121-225),(118-216)
2800000300001070002
(1-155),(2-166)
2800000300001260001
(161-221),(168-170)
2800000300001260002
(3-57),(10-94)
2800000300001350001
676853
(63-179),(98-172)
2800000300001350002
(1-113),(2-102)
2800000300001570001
(115-197),(104-170)
2800000300001570002
(87-101),(88-102)
2800000300001700001
2800000300001700002
2800000300001870001
(29-79),(2-6)
2800000300001870002
(1-27),(2-18)
2800000300002220001
(29-63),(20-48)
2800000300002220002
2900000100000700001
163000
2901
11401000000
2900000100000700002
163061
(74-88)
2900000100000700003
163046
(1-19),(2-22)
2900000100000740001
163030
(23-33),24,26
2900000100000740002
163057
(1-63),(2-82)
2900000100000760001
(65-91),(88-102)
2900000100000760002
63
2900000100000910001
(1-51),(2-60),61
2900000100000910002
(53-59),(62-98)
2900000100000910003
(1-55),57ª1
2900000100001130001
163015
2900000100001130002
163062
(7-23),(6-20)
2900000100001230001
163051
(1-5),(2-4)
2900000100001230002
163060
(16-28),1,7,9,11,27
2900000100002010001
(2-14),3,1ª1
2900000100002010002
2900000100003170001
163045
4,6,8
2900000100003170002
(37-55),(2-34),(40-54)
2900000100003170003
163002
(1-57),75,(2-50)
2900000100004430001
(52-999),(59-999)
2900000100004430002
2900000100004490001
2900000100004490002
2900000100004660001
(63-93),(68-84)
2900000100004660002
66,73
2900000100004710001
(1-71),(2-64)
2900000100004710002
(1-37),(2-16)
2900000100005210001
(1-11),(2-4)
2900000100005380001
2900000100005380002
(3-115),(2-136)
2900000100005550002
11,13
2900000100005860001
163009
(5-9),8
2900000100005860002
3000000100000170001
414019
3017
12401000000
73-93
3000000100000170002
414028
(95-113),93
3000000100000400001
414051
(1-93),(115-267),(2-120)
3000000100000400002
3000000100000490001
414040
3016
3000000100000490002
3015
3000000100000820001
414056
(30-36)
3000000100000820002
92,152-192
3000000100001240001
414000
(1-151),(2-82)
3000000100001240002
414024
3000000100001400001
414016
3023
3018
3000000100001450001
3000000100001450002
3000000100001500001
414015
3000000100001500002
414006
3000000100001620001
3000000100001620002
(1-67),(2-54)
3000000100001950001
(69-187),(56-186)
3000000100001950002
414018
3000000100002250001
(21-71),(22-122)
3000000100002250002
(75-149),(124-136)
3000000100002250003
414021
30,(51-69)
3000000100002540001
414004
(14-28),(32-46),(41-47)
3000000100002540002
414041
(2-6),(1-37)
3000000100002540003
414052
3000000100002930001
23-59
3000000100002930002
(1-57),(2-48)
3000000100003200001
(54-72)
3000000100003200002
3000000100003510001
3000000100003510002
21,23,25-62
3000000100003570001
3000000100003570002
3000000100004330001
,(13-63)
3000000100004330002
3000000100004750001
3-86
3000000100004750002
(1-35),(2-28)
3000000100004920001
(30-54),47,49
3000000100004920002
(2-54),(1-97)
3000000100005310001
(56-172),(99-173)
3000000100005310002
(1-51),(2-40)
3000000100005900001
(42-70),(53-111)
3000000100005900002
17-38
3000000100006110001
3000000100006110002
(4-42),(1-33)
3000000100006150001
(44-64),(35-51)
3000000100006150002
3000000100006180001
32-44
3000000100006180002
3000000100006310001
414057
(41-63)
3000000100006310002
414022
3000000100006350001
3000000100006350002
3000000100006350003
(2-30),(1-37)
3000000100006610001
(32-144),(39-145)
3000000100006610002
(27-71),(32-60)
3000000100007100001
(2-30),(1-25)
3000000100007100002
(1-63),(2-44)
3000000100007160001
414029
(46-50)
3000000100007160002
414032
(2-38),(1-23),33,37,53
3000000100007350001
(40-100)
3000000100007350002
3000000100007470001
(6-24),(1-25)
3000000100007470002
3000000100007680001
(52-58),(53-89)
3000000100007680002
(60-150),(91-149),96
3000000100007680003
3000000100007930001
3000000100007930002
(1-41),(2-46)
3000000100008100001
(48-68)
3000000100008100002
1-123,125,127
3000000100008140001
(124-178),(129-193)
3000000100008140002
3000000100008450001
3000000100008450002
3000000100008780001
3000000100008780002
3000000100009000001
3000000100009100001
3000000100009100002
3000000100009160001
414047
3000000100009160002
414013
1-23
3000000100009220001
(24-58),(25-65)
3000000100009220002
(62-120)
3000000100009220003
1-24
3000000100009690001
3000000100009910002
(2-20),(65-83)
3000000100009910003
(2-64),(1-51)
3000000100009950002
(66-86),(53-73)
3000000100009950003
(2-52),(1-63)
3000000100009980001
(54-74),(65-85)
3000000100009980002
1-68
3000000100010010001
69-94
3000000100010010002
3000000100010040001
(69-201),(70-200)
3000000100010040002
1-69,71
3000000100010070001
(70-200),(73-201)
3000000100010070002
(2-72),(1-55)
3000000100010100001
(74-100),(57-199)
3000000100010100002
(2-50),(1-29)
3000000100010130001
(52-100),(31-101)
3000000100010130002
(29-45),44
3000000100010180001
3000000100010180002
1,2,4-30
3000000100010320001
3000000100010320002
1-7,9,11
3000000100010350001
3000000100010350002
(126-166),(93-145)
3000000100010420001
(2-124),(1-91)
3000000100010420002
(3-41),(18-42)
3000000100010580001
414026
3000000100010580002
414042
3000000100010670001
(2-18),(23-81)
3000000100010670002
(1-49),(2-44)
3000000100010780001
(51-107),(46-108)
3000000100010780002
(2-72),(1-67)
3000000100010910001
(74-134),(69-123)
3000000100010910002
3000000100011070001
(33-53),(36-54)
3000000100011070002
3000000100011460001
(24-58),(29-65)
3000000100011460002
(60-108),(73-123)
3000000100011460003
3000000100011660001
37-50
3000000100011660002
(52-56)
3000000100011660003
3000000100011760001
(58-160),(1-153)
3000000100011760002
3000000100011820001
3000000100011820002
414038
3000000100011870001
(13-117)
3000000100011870002
3000000100011870003
414014
3000000100011940001
29-145
3000000100011940002
(1-97),(2-112)
3000000100012520001
(1-109),(2-112)
3000000100012620001
111,113-144
3000000100012620002
150-164
3000000100012620003
3000000100013330001
3000000100013370001
37-64
3000000100013370002
(124-200),(129-201)
3000000100013830001
(2-122),(1-127)
3000000100013830002
(1-109),(2-110)
3000000100013910001
111-163
3000000100013910002
3000000100013950001
39-58,58,(25-37)
3000000100013950002
(24-38)
3000000100013950003
3000000100014290001
3000000100014300001
3000000100014570001
3000000100014880001
17-70
3000000100014880002
3000000100015340001
9,11
3000000100015340002
(46-52),(47-51)
3000000100015540001
(2-44),(1-45)
3000000100015540002
(2-64),(1-81)
3000000100016260001
(66-126),(83-145)
3000000100016260002
34,36,38-153
3000000100017000001
(2-32),(1-37)
3000000100017000002
3000000100017070001
(2-60),(1-37)
3000000100017070002
1-44,43
3000000100017500001
61-66
3000000100017500002
(19-37),(28-38)
3000000100017700001
(2-26),(1-17)
3000000100017700002
69-135
3000000100017860001
(2-66),(1-79)
3000000100018240001
(68-158),(81-179)
3000000100018240002
(65-141),(90-142)
3000000100018360001
(2-88),(1-63)
3000000100018360002
(2-58),(1-43)
3000000100018410001
(62-100),(45-101)
3000000100018410002
3000000100019090001
3000000100019480001
(31-151),(40-152)
3000000100019630001
3000000100019630002
3000000100019820001
19,21-110
3000000100019820002
3000000100020470001
3000000100020550001
3000000100020550002
3100000100000010001
308024
3123
14401000000
3100000100000010002
308027
3100000100000060001
308019
(21-99),(24-96)
3100000100000060002
(1-14)
3100000100000180001
308034
(1-3),(7-35),(2-44)
3100000100000270001
308001
3100000100000270002
308000
(2-278),(1-123)
3100000100000310001
308006
(125-169)
3100000100000310002
308017
(1-49),(2-62),68
3100000100000400001
(57-71),(66-92)
3100000100000400002
3100000100000520001
61,(63-85),(56-80)
3100000100000520002
(2-19),(1-3)
3100000100000550001
308012
(44-50),(19-59)
3100000100000550002
308036
(9-27),(6-24)
3100000100000750001
308018
3100000100000750002
(1-32),(2-24)
3100000100000760001
(26-104),(33-39)
3100000100000760002
3100000100000790001
308020
(2-40),(69-121)
3100000100000790002
(123-131)
3100000100000790003
3100000100000880001
308002
(30-44),(1-43)
3100000100000880002
308023
(2-38),(1-37)
3100000100000920001
(39-121),(40-130)
3100000100000920002
(2-78),(1-39)
3100000100001060001
(80-96)
3100000100001060002
308014
3100000100001290003
(1-84),(87-115),(2-132)
3100000100001380001
(117-167),(85-86),(134-152)
3100000100001380002
(169-519),(154-414)
3100000100001380003
3100000100001480001
308009
3100000100001740001
(2-56),(5-55)
3100000100001740002
3100000100001750001
3100000100001750002
(3-71),(6-86)
3100000100001850001
(73-107),(88-116)
3100000100001850002
1-128,130-138
3100000100001920001
3100000100002030001
308013
(1-7),10
3100000100002120001
308015
(2-8),(12-14),9
3100000100002120002
308025
3100000100002150001
3100000100002150002
1-14,16,18-999
3100000100002150003
(1-35),(16-42)
3100000100002210001
3100000100002220001
(28-60)
3100000100002220002
308007
(39-83),(62-106)
3100000100002220003
3100000100002230001
(22-30)
3100000100002230002
(105-151),(96-132)
3100000100002340001
3100000100002340002
(23-103),(48-92)
3100000100002340003
(1-11),17,17,(2-18)
3100000100002360001
(13-17),(19-35),(20-42)
3100000100002360002
(1-19),(2-16)
3100000100002700001
(27-45),(18-52)
3100000100002700002
(1-37),(2-11)
3100000100002720001
(43-83),(12-80)
3100000100002730001
(85-169),(104-146)
3100000100002730002
(1-37),39 ,(2-56)
3100000100002810001
(2-42),(1-16)
3100000100003000001
(5-29),(32-115)
3100000100003180001
(1-87),(2-84)
3100000100003350001
3100000100003530001
308032
3100000100003530002
308010
(3-17),(2-14)
3100000100003600001
(16-42),1,17,19
3100000100003600002
(1-103),(2-56)
3100000100004020001
(107-134),(58-82)
3100000100004020002
(84-104)
3100000100004020003
(106-158),(135-136)
3100000100004020004
(137-209),(160-168)
3100000100004020005
3100000100004040001
(21-35),(20-40)
3100000100004040002
(75-97),68
3100000100004130001
(2-60),(1-57)
3100000100004130002
(1-37),(14-32)
3100000100004370001
(45-59),(34-64)
3100000100004370002
3100000100004370003
(7-31),(38-44),37,39,41
3100800100000160001
309188
3127
14430000000
(1-5),(2-26)
3100800100000160002
309183
265-365
3200000100000430002
241010
3255
3232
15401365000
366-999
3200000100000430003
241024
(3-89),(2-100)
3200000100000430005
241007
3250
3234
15401375000
(72-88),(90-96),134
3200000100000520001
241039
3254
3235
15401380000
3200000100000520002
241029
3200000100000610001
241035
43,45-998
3200000100000610002
241013
3200000100000730001
42-998
3200000100000730002
(25-55),(65-89),(103-145),(16-140)
3200000100000780001
241006
3200000100000950001
3200000100000950002
241012
(1-71),(2-70)
3200000100001010001
241016
128-999
3200000100001010002
241017
72-126
3200000100001010003
241014
(1-39),(2-42)
3200000100001330001
241030
(58-998)
3200000100001330002
(2-30),(1-15)
3200000100001360001
(32-68),(17-67)
3200000100001360002
(82-148),(75-123)
3200000100001360003
(16-26),(1-49)
3200000100001850001
(2-14),1
3200000100001850002
(28-998),(51-999)
3200000100001850003
3200000100001980001
18-999
3200000100001980002
(17-65),(8-76)
3200000100002020001
(1-11),(2-6),78,80
3200000100002020002
241050
(138-998),(109-155)
3200000100002050001
(2-30),(1-13)
3200000100002050002
(32-136),(15-107)
3200000100002050003
3200000100002110001
(39-57),(44-64)
3200000100002110002
(1-11),(2-8)
3200000100002460001
(10-20),(13-21)
3200000100002460002
1-11,13
3200000100002510001
(13-23),(12-20)
3200000100002510002
3200000100002530002
3200000100002530003
(104-998),(67-999)
3200000100002570002
3200000100002570003
3200000100002620002
(2-26),(1-15)
3200000100002770001
(28-998),(17-999)
3200000100002770002
3200000100002830001
(20-998),(17-999)
3200000100002830002
(110-998),(99-999)
3200000100003120001
(2-28),(1-21)
3200000100003120002
(30-108),(23-97)
3200000100003120003
(78-998),(71-125)
3200000100003160001
(2-76),(1-69)
3200000100003160002
3200000100003250001
3200000100003520001
(110-998),(65-999)
3200000100003520002
(4-108),(1-63)
3200000100003520003
(2-48),(1-77)
3200000100003560001
(50-68),(79-83)
3200000100003560002
(84-998),(67-999)
3200000100003610001
(1-65),(2-82)
3200000100003610002
(1-49),(2-56)
3200000100003620001
(58-100),(51-105)
3200000100003620002
3200000100003650001
(60-82),(67-91)
3200000100003650002
3200000100004100001
(31-999),(28-998)
3200000100004100002
(32-998),(25-999)
3200000100004130001
(2-30),(1-23)
3200000100004130002
(2-14),(1-15)
3200000100004260002
(16-998),(17-999)
3200000100004260003
(46-64),(77-131)
3200000100004310001
(88-998),(81-103),107
3200000100004340001
(2-86),(1-79)
3200000100004340002
3200000100004400001
(2-998),(1-57)
3200000100004400002
(18-22),23-999
3200000100004640001
3200000100004640002
3200000100005000001
(6-38),(1-39)
3200000100005000002
122-999,(109-121)
3200000100005050001
(2-120),(1-107)
3200000100005050002
(2-40),(1-47)
3200000100005110001
(42-48),49-999
3200000100005110002
2,20,(9-17)
3200000100005240001
(4-18),(1-7)
3200000100005240002
18,20,(43-999)
3200000100005270001
(2-16),(1-41)
3200000100005270003
3200000100005320001
(7-43),(4-38)
3200000100005320002
1-11,(12-22)
3200000100005370001
(24-998),(13-999)
3200000100005370002
2,4,6,(1-23)
3200000100005510001
(42-998),(53-999)
3200000100005510002
(8-36),(25-41)
3200000100005510003
36 ,(38-40),(43-51)
3200000100005510004
92-96,87,89,90,91,91,98-130,132-998
3200000100005540001
241004
(2-54),(1-37)
3200000100005540002
(56-90),(39-85)
3200000100005540003
241020
(62-66),67-999
3200000100005660001
3200000100005660002
(142-998),(147-999)
3200000100005710002
(2-140),(1-145)
3200000100005710003
(2-48),(1-29)
3200000100005930001
(50-114),(31-73)
3200000100005930002
125,164
3200000100005930003
116/51,75/49,(118-160),(77-129)
3200000100005930004
3200000100005960001
3200000100005960002
106-998,(99-105)
3200000100006020001
(98-104),1-97
3200000100006020002
3200000100006100001
38,13-23,38
3200000100006100002
(68-72),(49-57)
3200000100006170001
(2-66),(1-47)
3200000100006170002
(37-85)
3200000100006650001
241028
(2-56),(1-35)
3200000100006650002
241019
(33-41),34
3200000100006810001
(2-28),36,(42-78),(1-31),(43-85)
3200000100006810002
3200000100006910001
54,56
3200000100006910002
(1-69),71,(2-52)
3200000100007270001
(86-998),(75-999)
3200000100007270002
(10-48),(21-71)
3200000100008040002
(50-998),(73-999),(2-6),(1-19)
3200000100008040003
(3-15),16-999
3200000100008110001
(2-14),1
3200000100008110002
3200000100008130001
(82-998),(101-999)
3200000100008130002
43
3200000100008570002
(2-100),(29-119)
3200000100008610002
(102-130)
3200000100008610003
(1-15),(2-20)
3200000100008810001
(22-998),(17-999)
3200000100008810002
(2-8),(1-7)
3200000100008910001
241027
(20-28),(11-15)
3200000100008910002
241025
(2-8),(1-17)
3200000100008920001
(10-24),(19-25)
3200000100008920002
(13-115)
3200000100009050002
(2-78),(1-11)
3200000100009050003
(80-998),(117-999)
3200000100009050004
(2-104),(1-95)
3200000100009620002
(2-88),(1-111)
3200000100009720001
(90-998),(113-999)
3200000100009720002
3200000100009910001
126-163
3200000100009910002
62 ,(64-102),(55-999)
3200000100009940001
(2-62),(1-53)
3200000100009940002
(2-30),(1-19)
3200000100010200002
(2-38),(1-47)
3200000100010330001
40
3200000100010330002
3300000100000310001
600005
3328
17401370000
3300000100000310002
600026
3300000100000360001
9-34,36
3300000100000360002
17401000000
11-57
3300000100000400001
600028
3327
17401365000
12/18,14/45,17/4,22,16
3300000100000400002
600015
3300000100000410001
600017
3300000100000410002
3300000100000540001
3300000100000540002
600033
3300000100000590002
600037
3300000100000590003
600022
3300000100000670001
23,25,27-999
3300000100000670002
11,13,15,16,23
3300000100000730001
600000
3340
3329
17401375000
3300000100000730002
600020
3300000100000800001
600016
3300000100000800002
600031
(1-67),(2-44)
3300000100000930001
(69-85),(46-70)
3300000100000930002
(89-999),(72-999)
3300000100000930003
3300000100000960001
6/88
3300000100000960002
600007
3300000100000970001
3300000100000970002
1,2-4,6-14,16-999
3300000100001000001
600001
5,5/1,1,13,15
3300000100001000002
2,6-999
3300000100001050001
3300000100001050003
2-66
3300000100001090001
(104-164),(161-191)
3300000100001090002
(166-208),(193-199)
3300000100001090003
(210-999),(201-999)
3300000100001090004
9-16
3300000100001150001
600032
3300000100001150002
3300000100001210001
18,20,22
3300000100001210002
600018
2,8
3300000100001210003
3300000100001260001
3300000100001260002
3300000100001280001
3300000100001280002
3300000100001300001
19-41
3300000100001300002
42-72
3300000100001300003
21,(12-20)
3300000100001420001
22-999
3300000100001420002
600009
3300000100001420003
1,3,3,5
3300000100001570001
600035
41-69
3300000100001570002
(7-39),16
3300000100001570003
600027
(2-14),(18-28)
3300000100001570004
1-37,(39-47),48,50,54,64,82
3300000100001690001
600021
49
3300000100001690002
(38-46)
3300000100001690003
3300000100001700001
3300000100001700002
3300000100001770001
32-999
3300000100001770002
1-139
3300000100001860001
600014
140-156
3300000100001860002
157-999
3300000100001860003
73-999
3300000100001880001
600036
3300000100001880002
(22-36),(23-41)
3300000100001880003
(38-72),(43-71)
3300000100001880004
23-999
3300000100001890001
3300000100001890002
1-26,28-33,35-999
3300000100001920001
27,34
3300000100001920002
(1-21),(2-28)
3300000100001960001
(23-43)
3300000100001960002
3300000100002140001
59,61,(74-94)
3300000100002140003
8,14
3300000100002140004
(17-27),(18-36)
3300000100002140005
(37-51),(38-72)
3300000100002140006
51
3300000100002170001
(1-49),(2-20)
3300000100002170002
(53-59),(28-36)
3300000100002170003
,4
3300000100002370001
3300000100002370002
1-26,32-53,(55-73),74-999
3300000100002460001
(27-31),79
3300000100002460002
3300000100002460003
47
3300000100002540003
(1-29),(2-20)
3300000100002580001
(22-68),(31-101)
3300000100002580002
(70-100),81
3300000100002580003
1-6,8,12,10
3300000100002610001
(7-59),(14-60)
3300000100002610002
23-53,64
3300000100002650001
3300000100002650002
(57-999),(76-999)
3300000100002650003
1-19,20
3300000100002760001
20-24
3300000100002760002
25-999
3300000100002760003
3300000100002890001
17-27,29-32,34-73
3300000100002890002
28,33,75-101
3300000100002890003
1-45
3300000100002910001
47-999
3300000100002910002
1-20,22,24
3300000100002930001
21,26-999
3300000100002930002
3300000100003000001
15-21,(22-26)
3300000100003000002
(25-59),(28-38),42,63
3300000100003000003
(73-83),76,65,110
3300000100003000004
(17-23)
3300000100003100001
(5-11),4,6
3300000100003100002
3300000100003100003
3300000100003120001
3300000100003120002
3300000100003230001
4
3300000100003230002
1-28,30-999
3300000100003270001
3300000100003270002
1,3,27,27
3300000100003290001
2,4-27,28,29,30-999
3300000100003290002
29
3300000100003290003
3300000100003330001
3300000100003330002
(29-101)
3300000100003330003
(4-42)
3300000100003330004
(44-999),149
3300000100003330005
14-35
3300000100003440001
3300000100003440002
12,14,16-999
3300000100003460001
(1-15),(2-10)
3300000100003460002
3300000100003550001
48-60
3300000100003550002
3300000100003560001
19-999
3300000100003560002
3300000100003670001
600024
7-10,12
3300000100003670002
3300000100003720001
3300000100003720002
3300000100003720003
3300000100003720004
3300000100003720005
3300000100003770001
(11-31),(18-28)
3300000100003770002
1,3,4,77,(79-87),89-999
3300000100003800001
(1-75),(2-88)
3300000100003800002
1,2,4,6,8,9,10,12-58
3300000100003950001
59-999
3300000100003950002
600011
(1-53),(2-74)
3300800100000050002
601900
3332
3305
17425000000
(61-169),(78-142)
3300800100000050003
601902
74,76
3300800100000150001
601915
(1-63),(2-64)
3300800100000150002
601910
(87-101)
3300800100000150003
601914
(1-103),(2-104)
3300800100000230001
601903
(106-151),(114-156)
3300800100000230002
50,52,54
3300800100000360001
(43-69),(36-48)
3300800100000360003
3300800100000370001
(21-29),(4-8)
3300800100000370002
(3-49),(4-56)
3300800100000520001
601911
(69-77),(84-86)
3300800100000520002
601916
(1-61),(4-54),(60-76)
3300800100000550001
(63-195),(78-204)
3300800100000550002
(1-25),(28-92),26,31,71
3300800100000850006
(93-103),(102-116)
3300800100000850007
(77-167),(110-156)
3300800100000950001
(3-75),(4-108)
3300800100000950002
(12-24)
3300800100001090001
(28-54),(33-37)
3300800100001090002
(1-15),(4-14)
3300800100001180001
601909
(27-47)
3300800100001180002
3300800100001180003
(1-19),2,(10-44)
3300800100001200001
(57-63),(56-58)
3300800100001200002
17,(20-46)
3300800100001260001
(1-15),(6-14)
3300800100001260002
(19-55),(48-88)
3300800100001260003
(43-67),(32-84)
3300800100001280001
(71-97),103,105,(98-120)
3300800100001280003
(1-11),(10-32)
3300800100001320001
(13-59),(44-72)
3300800100001320002
601901
(3-17),(2-26)
3300800100001330001
3300800100001330002
(1-55),(2-54)
3300800100001410001
(69-75),(66-78)
3300800100001410002
(19-47),(2-6)
3300800100001440001
(79-89),24,28,(60-110),30
3300800100001440002
(11-17),(12-26)
3300800100001790001
(27-53),(28-68)
3300800100001790002
(3-31),(2-34)
3300800100001810001
601907
(70-112)
3300800100001810002
73,75,77
3300800100001840001
(1-41),(4-38)
3300800100001840002
(57-81),(58-68)
3300800100001840003
(19-59),(30-34)
3300800100002060001
(3-13),(4-20),38
3300800100002060002
(61-87),(54-86)
3300800100002060003
3300800100002060004
3300800100002080001
3300800100002080002
(15-29),(16-28)
3300800100002100001
(45-93),(78-102)
3300800100002100002
(1-29),(2-8)
3300800100002210001
(31-45),(18-20)
3300800100002210002
(1-23),(2-8)
3300800100002340001
(25-47),(10-20)
3300800100002340002
3300800100002370001
(17-27),(18-26)
3300800100002370002
1,(2-20)
3300800100002390001
(23-91),(24-84)
3300800100002390002
(1-67),(4-56)
3300800100002580001
(79-81)
3300800100002580002
3300800100002640001
(17-41),(34-98)
3300800100002640002
(3-7),(21-39),(4-8),(26-44)
3300800100002660001
(47-83),(50-100)
3300800100002660003
3300800100002740001
(23-45),(38-86)
3300800100002740002
(21-37),(54-68),17
3300800100002750001
(14-18)
3300800100002750002
(1-37),(2-28)
3300800100002800001
(57-131),(48-80)
3300800100002800002
(1-41),(2-52)
3300800100002840001
(45-159),(54-224)
3300800100002840002
3300800100002850001
3300800100002850002
(1-3),(4-32)
3300800100002910001
3300800100002910002
(55-61),(48-50)
3300800100002910003
(13-15),(12-16)
3300800100003030001
(3-11),(4-10)
3300800100003030002
(26-40),(55-65)
3301100100000060001
602265
3334
3307
17435000000
3301100100000060002
602251
(2-20),(1-11)
3301100100000060003
602267
(2-46),(1-35)
3301100100000080001
602256
(48-58),37
3301100100000080002
602266
2,4,56,6,10,12,54/2
3301100100000090001
(76-98),(75-103)
3301100100000130001
(2-74),(5-71)
3301100100000130002
(32-102),(29-99)
3301100100000140001
602252
(2-22),(1-27)
3301100100000140002
602262
(38-106),(47-105)
3301100100000330001
(2-36),(1-45)
3301100100000330002
(4-34),(39-67)
3301100100000360001
602253
(69-71)
3301100100000360002
602257
3301100100000360003
602264
(2-6),(14-24),(1-3)
3301100100000400001
(8-12),(26-34),(5-15),1
3301100100000400002
(70-80),(41-53)
3301100100000470001
(2-68),(1-39)
3301100100000470002
(2-30),11
3301100100000480001
3301100100000490001
(8-56),(7-15)
3301100100000490002
(2-38),(1-39)
3301100100000540001
602263
(40-82),(41-65)
3301100100000540002
(26-30),27,24
3301100100000590001
3301100100000590002
602254
3301100100000590003
(2-40),(1-5)
3301100100000610001
(42-50),(7-43)
3301100100000610002
(86-92),(83-89)
3301100100000620001
(34-84),(41-81),26,23
3301100100000620002
(2-24),(26-32),(3-21),(25-39)
3301100100000620003
(90-110),(115-131)
3301100100000640001
(2-88),(1-113)
3301100100000640002
3301100100000680001
(20-26),(15-19)
3301100100000690001
(12-20),(17-25)
3301100100000700001
(2-12),(1-21)
3301100100000710001
(54-96),(57-111)
3301100100000730001
3301100100000730002
(48-66),(67-71)
3301100100000740001
(2-46),(1-63)
3301100100000740002
(46-62),(65-85),49
3301100100000810001
(2-44),(1-47),(51-55)
3301100100000810002
(68-86)
3301100100000890001
(112-126),(132-136),(103-199)
3301100100000890002
(96-108),(91-101)
3301100100000890003
(90-94),(71-89)
3301100100000890004
(128-130),(138-142),(201-211),250
3301100100000890005
(2-64),(1-69),85
3301100100000890006
(34-36),(25-35)
3301100100000920001
(2-32),(1-17)
3301100100000920002
(26-106),(27-73),9
3301100100001000001
27,27,25,26,27
3301100100001030001
(2-14),(3-23),25,25,1
3301100100001030002
(58-112),(65-113)
3301100100001080001
(4-56),(3-63)
3301100100001080002
3301100100001180001
(59-75)
3301100100001180002
(70-106)
3301100100001190001
(2-68),(1-79)
3301100100001190002
(14-48),(15-31)
3301100100001220001
(34-38),(42-48),(41-65)
3301100100001290001
(2-30),40,(1-37)
3301100100001290002
(2-8),(3-21)
3301100100001310001
(46-70),(51-75)
3301100100001330001
(2-44),(1-49)
3301100100001330002
(38-58),(11-13),15
3301100100001340001
(64-96),(1-9),(15-37)
3301100100001340002
(8-34),(7-35)
3301100100001390001
(12-66),(29-99)
3301100100001490001
(1-19),8,2
3301100100001490002
(11-21),10
3301100100001500001
(2-6),(1-7)
3301100100001500002
(14-72),(1-79),2,4,6,8,12
3301100100001580001
(74-84)
3301100100001580002
4,6,8,10,16,20,5,7,9,11,10
3301100100001580003
(15-45),14
3301100100001610001
(24-48)
3301100100001610002
(2-6),(5-37),34
3301100100001620001
(10-12)
3301100100001620002
(2-74),(1-59)
3301100100001630001
(90-100),(61-73)
3301100100001630002
3301100100001660001
(2-46),(1-53)
3301100100001680001
(48-58),(55-69)
3301100100001680002
(1-133),(2-156)
3301600100000380001
601293
3336
3310
17445000000
(135-999),(158-999)
3301600100000380002
601291
3400000100000360001
400074
3460
3445
18401363000
(4-32),25
3400000100000360002
400001
3400000100000420001
400123
3459
3442
18401380000
(27-35)
3400000100000420002
400088
(1-47),(2-98),77,79,104
3400000100000690002
400120
(49-73)
3400000100000690003
400054
3400000100001280001
400015
3441
18401390000
3400000100001280002
400065
(33-75),(40-66),10,16,84
3400000100001320001
(2-8),12
3400000100001320002
3400000100001420001
3400000100001610001
400033
(11-19),18,20
3400000100001610002
400093
3400000100001610003
400125
(27-33),(18-30)
3400000100001900001
400064
(5-17),(6-8),(14-16)
3400000100001900002
400078
64,66
3400000100002000001
400040
2-46
3400000100002000002
400127
3400000100002030001
400007
(26-76),(27-73)
3400000100002030002
(8-18)
3400000100002030003
400105
1,3,(4-24)
3400000100002040001
5,7,32,34
3400000100002040002
(3-5),(2-4)
3400000100002140002
400009
52,54,56,(60-66),(68-74),40 ,44
3400000100002170001
(15-35),(120-138)
3400000100002170002
(49-61),47¡,71 
3400000100002170003
(142-156)
3400000100002170004
(78-88)
3400000100002170005
(92-118)
3400000100002170006
3¤
3400000100002170007
31/1,(33-61),(26-48),31
3400000100002270001
63/1,50,52,63,65
3400000100002270002
(1-29),(12-24)
3400000100002270003
(3-21),(4-22)
3400000100002290001
(54-222),(41-137),161
3400000100002290002
(63-75),(64-76)
3400000100002300001
(1-61),(2-62)
3400000100002300002
3,5,7,9,11,2,(12-30)
3400000100002340001
9,13,15,11 
3400000100002340002
(1-17),4,6 
3400000100002350001
55,59,51,53,57
3400000100002440001
3400000100002440002
(17-47),(34-50)
3400000100002440003
(61-93),(56-72)
3400000100002440004
3400000100002450001
(3-17)
3400000100002450002
(1-141),(14-138)
3400000100002460001
3400000100002460002
(6-36)
3400000100002490001
(11-31),(67-135),(38-42),(70-168)
3400000100002490002
3400000100002490003
(1-35),(2-42)
3400000100002510001
(37-65),(44-64)
3400000100002510002
3400000100002550001
(53-61),46,(50-68)
3400000100002550002
(5-47),(2-44)
3400000100002550003
3400000100002580001
6,12
3400000100002580002
16,22-26,31-33,41-52
3400000100002790001
(5-17),(2-10),14
3400000100002790002
(1-15),14,12
3400000100003080001
3400000100003080002
(16-30),5,7,15
3400000100003470001
(2-14),3
3400000100003470002
(5-57),(12-74)
3400000100003710001
(2-10),3
3400000100003710002
(3-43),(4-34)
3400000100003720001
(49-73),(38-74)
3400000100003720002
3400000100004000001
(13-39),(2-10)
3400000100004000002
(1-55),(2-42)
3400000100004060001
400006
(57-85),(44-84)
3400000100004060002
400046
24,30-102
3400000100004070001
3400000100004070002
3400000100004150001
36,38,40,49
3400000100004150002
(1-17),(2-26)
3400000100004450001
(19-49),(28-52)
3400000100004450002
(1-3),(4-6)
3400000100004520001
(9-39),(10-40)
3400000100004520002
3400000100004750001
400075
3443
18401365000
(7-11),(8-136),15,15¤,(17-67),69
3400000100004780001
400081
13,13¤,13ª,13«,13¬,15¡,15£
3400000100004780004
400049
2,2 ,5,8,8¡,8¤,10,10¤,12,18,18 
3400000100004800001
400048
(1-3),6 ,6¡,6¤,7 ,(9-17)
3400000100004800002
(3-17),(14-46)
3400000100004840001
400094
3400000100004840002
3400000100005260001
(29-67),(32-74)
3400000100005260002
139,(167-175),179,(194-216)
3400000100005520001
400050
3444
18401395000
(3-7),16
3400000100005520003
400131
(28-46),56
3400000100005520004
400087
3400000100005540001
(13-43),(26-48)
3400000100005540002
3400000100005560001
(23-83),(24-76)
3400000100005560002
(1-15),(12-40)
3400000100005790001
(19-21),23,(25-47),(44-72),67,69
3400000100005790002
400117
(1-31),(97-117),(2-36)
3400000100005860001
(33-69),(38-72)
3400000100005860002
(17-95),(20-126)
3400000100005900001
400010
(1-67),(4-62)
3400000100006000001
(64-86),99,105
3400000100006000002
400107
13,14¡,14¤,16,16 ,(18-30)
3400000100006040001
(34-36),47 ,(57-61),72
3400000100006040002
3400000100006040004
400137
(5-9),(13-17)
3400000100006140001
(4-10),(14-20)
3400000100006140002
(22-28),(36-56),(25-67)
3400000100006140003
400012
(1-61),(8-62),74,92,94 ,96¡,92 ,86 
3400000100006180001
400021
3461
3447
18401370000
(37-39),40,46
3400000100006290001
6
3400000100006420001
(1-35),(2-4),14
3400000100006420002
3400000100006440001
(5-9),(14-16)
3400000100006440002
3400000100006460001
20-26
3400000100006460002
3400000100006520001
3400000100006630001
400038
3446
18401385000
(105-125),(128-140)
3400000100006630002
400111
3448
18401375000
(1-23),(2-10),12
3400000100006660001
(1-5),(2-54)
3400000100006730001
72-80
3400000100006730002
23,(20-24)
3400000100006800001
3400000100006800002
(17-31),28¤
3400000100007010001
(4-6),(16-26),28,28¡,28£,(30-42)
3400000100007010002
(119-167),(102-168)
3400000100007040001
(35-117),(58-100)
3400000100007040002
3400000100007240001
(2-20),24
3400000100007240002
(17-29),(37-41),(55-57),(63-69),81
3400000100007240003
3400000100007250001
(31-59),(36-40)
3400000100007250002
3400000100007270001
3400000100007290001
13-49
3400000100007290002
3400000100007330001
(13-41),(14-64),49¡
3400000100007330002
(41-55),(44-60),76,78
3400000100007370001
(71-89),(80-106)
3400000100007370002
(1-67),(2-12)
3400000100007420003
(107-147),(120-174)
3400000100007470001
(9-103),(8-118)
3400000100007470002
13,25,(24-26)
3400000100007510001
(31-59),(30-56)
3400000100007510002
(3-57),58,73
3400000100007540001
3400000100007540002
(3-21),(2-22),(27-55)
3400000100007590001
(59-119),(26-46)
3400000100007590002
1-76
3400000100007690001
84,96
3400000100007690002
3,11,(6-12),18,20
3400000100007730002
(113-173),(116-180)
3400000100007850001
(53-111),(62-114)
3400000100007850002
(1-35),(2-22)
3400000100008290001
(37-97),(24-74)
3400000100008290002
3400000100008510001
(37-83),(34-78)
3400000100008510002
(1-21),(2-72)
3400000100008940001
(1-65),(24-68)
3400000100008970001
3400000100008970002
1-4,(127-155),6,8,(126-172)
3400000100009010001
9-28,30
3400000100009010002
(2-10),(1-11)
3400000100009070001
(25-73),(12-68)
3400000100009070002
(1-45),(2-30)
3400000100009240001
(47-109),(32-78)
3400000100009240002
(10-16),15,17
3400000100009400001
3400000100009400002
(5-23),(2-8),(14-24)
3400000100009410001
400073
(16-54)
3400000100009750001
3400000100009750002
56/4,56/5
3400000100009900001
(3-99),(2-10),(60-98)
3400000100009900002
44-47,49
3400000100009950001
(1-29),(2-34)
3400000100009950002
(7-27),(4-30),40
3400000100010110001
400082
3400000100010110002
400055
(1-31),(8-32)
3400000100010150001
400051
33,(38-42)
3400000100010150002
400080
(1-11),(4-14)
3400000100010230001
3400000100010230002
(13-27),(24-32),20,11,22
3400000100010230003
(35-69),(40-48)
3400000100010230004
3400000100010350001
400121
(15-27),(26-46),13¡
3400000100010350002
3400000100010350003
(25-123),(2-106)
3400000100010500001
400086
(125-313),(108-284)
3400000100010500002
400022
(1-59),(2-58)
3400000100011040001
3400000100011040002
(1-111),(2-116)
3400000100011500001
(113-117)
3400000100011500002
(11-45)
3400000100011610001
400112
(47-55)
3400000100011610002
400026
(1-13),(4-12)
3400000100011710001
(14-112),15,(101-113)
3400000100011710002
3400000100011820001
(19-67),(18-58)
3400000100011820002
2,(76-88)
3400000100011860001
(7-77),(8-70)
3400000100011860002
3400000100011930001
(7-31),(10-42)
3400000100011930002
3400000100012210001
3400000100012210002
400031
115,117,153,170,172
3400000100012580001
(53-113),(119-145),(66-166)
3400000100012580002
(5-17),(8-48),33
3400000100012790001
(1-53),(4-46)
3400000100012820001
48,50,52
3400000100012820002
400023
(1-53),(2-54)
3400000100012870001
(57-111),(60-118)
3400000100012870002
400059
3400000100013000001
(3-113),(54-64),68 
3400000100013030001
3400000100013080001
(1-17),6,33,21
3400000100013080002
(3-97),(2-100)
3400000100013120001
(105-255),(106-236)
3400000100013120002
3,5,17,19,(14-16)
3400000100013470001
(18-42),(23-43)
3400000100013470002
(1-13),2/4
3400000100014040001
(19-101),(2-64)
3400000100014040002
2,(1-103)
3400000100014190001
(4-118),(3-115)
3400000100014420001
(1-15),(2-118),(41-81)
3400000100014740001
(1-79),(2-16)
3400000100014810001
400057
(1-113),(2-114)
3400000100014830001
(1-17),(2-10),40
3400000100014920001
(21-61),(14-38)
3400000100014920002
(2-12),14 ,3
3400000100015150001
(39-67),(89-95),34,84,84 ,76,76 
3400000100015180001
(15-39),(8-26)
3400000100015210001
(1-13),(2-22)
3400000100015320001
(15-45),(26-44)
3400000100015320002
(15-23),(22-40)
3400000100015380002
3400000100015380003
(1-37),(2-62)
3400000100015460001
(41-97),(64-120)
3400000100015460002
(1-41),(2-44)
3400000100015480002
(43-73),(46-86)
3400000100015480003
3400000100015530001
(23-53),(22-56)
3400000100015530002
(123-159),(88-128)
3400000100015550002
(1-121),(401-409),(2-86),(402-410)
3400000100015550003
(1-25),77,(20-92)
3400000100015610001
(94-150)
3400000100015610003
3400000100015840001
(47-89),(60-94)
3400000100015840002
3400000100016280001
(7-21),(4-34)
3400000100016280002
(1-5),7,(2-8)
3400000100016320001
(9-51),(10-54)
3400000100016320002
(123-149),(140-162)
3400000100016420001
8,8 ,12
3400000100016420003
42,(22-36),(27-35)
3400000100016430001
3400000100016430002
3400000100016430003
1-4,6,8
3400000100016560001
(5-49),(10-64)
3400000100016560002
(1-5),2,4
3400000100016670001
(7-53),(6-42)
3400000100016670002
3400000100017420001
3400000100017420002
3400000100017960001
3400000100017960002
3400000100023000001
3400000100023000002
(50-54),(72-78),71
3400000100023000003
(8-50),66,68,70,62,53
3400000100023030001
78,100,100 
3400000100023030002
3400000100023030003
27 ,(29-43),42,72 ,(74-78),80
3400000100023130001
3400000100023210001
3400000100023210002
3400000100023280001
3400000100023280002
3400000100023310001
(9-19),(6-12)
3400000100023310002
(1-17),(2-18)
3400000100023650001
(19-87),(20-84)
3400000100023650002
(9-95),(54-90)
3400000100023750002
3,5,(97-119),(4-52),(92-102)
3400000100023750003
(5-11)
3400000100023770001
(109-163),(122-162)
3400000100024060001
(81-107),(68-120)
3400000100024060002
3400000100024170001
(37-83),(36-80)
3400000100024170003
16-20
3400000100024290001
400011
2-14
3400000100024290002
400002
(45-95),(24-66),17,21
3400000100024310002
3400000100024310003
(25-107),(22-108)
3400000100024320001
3400000100024860001
(166-190)
3400000100024860002
(171-175)
3400000100024910002
(25-39),(32-44),88
3400000100024910003
(11-23),(16-30)
3400000100024910004
(151-159),(165-169),(177-189),314
3400000100024910005
32-35
3400000100025460001
3400000100025470001
(1-29),6
3400000100026160001
(33-39)
3400000100026160002
(105-119),112¡
3400000100026200003
(121-155),(114-120)
3400000100026200004
(173-195),122
3400000100026200005
(197-205),124
3400000100026200006
(207-231),122 ,124 ,(126-150),224
3400000100026200007
(65-81),(94-102)
3400000100026200008
(83-103),110
3400000100026200009
(28-78),(25-59)
3400000100026200010
400005
(1-7),(13-17),(21-23)
3400000100026200013
9-40
3400000100026320001
3400000100026320002
(1-27),(50-82)
3400000100026350001
(10-46),2,2 ,2¡,1,1,1,1,11 ,13 ,1¥
3400000100026350002
(2-6),(3-11),10
3400000100026380003
3400000100026380004
47,72,93,93 
3400000100026380005
4,(11-15),(12-24),33
3400000100026390001
192
3400000100026390002
(26-42),(27-43)
3400000100026390003
25 ,31,(34-64)
3400000100026400002
(1-17),(6-18),(22-32)
3400000100026400003
(1-5),2,11,15,21
3400000100026410001
60,60
3400000100026410002
(1-5),2,12,24,(15-35)
3400000100026420001
(60-66),(39-63),70,72
3400000100026420002
3400000100026440001
(3-25),(4-26)
3400000100026450001
(27-55),26 ,26¡,(28-38)
3400000100026450002
(1-35),2,4,4 
3400000100026460001
48,(37-57),65,65 ,69,(71-77)
3400000100026460002
12,13
3400000100026490001
3400
18401000000
(1-35),(2-44),72-86,103-133
3400000100026660001
(31-85),(40-100)
3400000100026720001
(38-62)
3400000100026800001
3400000100026800002
(21-49)
3400000100026800004
3400000100026830001
3400000100026830002
(32-50)
3400000100026830003
400096
(1-89),(2-98)
3400000100026840001
3400000100026840002
3400000100026880001
400029
(91-105)
3400000100026880002
3400000100026880003
45,47,(51-89)
3400000100026880004
(125-359),(124-324)
3400000100026940001
47,(67-123),54,56,64,66,68,(86-122)
3400000100026940002
3400000100026980001
(1-107),(2-114)
3400000100027010001
(109-259),(120-248)
3400000100027010002
(1-59),(2-80)
3400000100027160001
(61-167),(82-130),142
3400000100027160002
(1-99),(2-96)
3400000100027230001
(101-249),(102-240)
3400000100027230002
4,(8-20)
3400000100027250001
(3-23)
3400000100027250002
(57-127),(24-28)
3400000100027250003
3400000100027450001
(2-26),(17-21)
3400000100027450002
(1-115),46 ,50
3400000100027510001
3400000100027510002
(124-360)
3400000100027690001
26,28,30,(54-122)
3400000100027690002
(1-21),(8-26)
3400000100027720001
(23-31),(30-102),21£,24 ,24¡
3400000100027720002
(33-55),61
3400000100027720003
(3-59),(4-68)
3401100100000050001
403873
3453
3436
18415000000
(105-109)
3401100100000050002
403876
(128-160)
3401100100000050004
403892
3401100100000060001
403888
3401100100000060002
403879
(55-71),(76-98)
3401100100000070001
(13-53),(20-74),7,9
3401100100000070002
403882
(73-109),(100-144)
3401100100000070003
403889
(27-45),(36-92)
3401100100000130001
3401100100000130002
403893
(2-22),7
3401100100000240001
403874
26-62
3401100100000240002
3401100100000250001
3401100100000250002
(1-33),(2-36)
3401100100000460002
(38-76),(35-73)
3401100100000460003
(1-33),(2-32)
3401100100000530001
(34-60),(35-43)
3401100100000530002
(5-31),(42-68)
3401100100000720001
(1-3),(4-40)
3401100100000720002
(45-61),(46-48)
3401100100000870001
(1-43),(2-44)
3401100100000870002
(125-131),(132-142)
3401100100000920001
403895
(96-130),(87-121)
3401100100000920002
(53-85),(54-94),1,3,5,9
3401100100000920003
(1-23),2,6,10
3401100100000960001
(12-20),(25-55)
3401100100000960002
403877
29,40-76
3401100100001000001
2,4,16,20,24,(1-25)
3401100100001000002
106-190
3401100100001060001
(30-48),(39-63)
3401100100001060003
2,3,5
3401100100001180001
406886
(123-145)
3401100100001180002
406871
56,85
3401100100001180003
(44-92),(73-111)
3401100100001250003
3401100100001250004
403886
(10-42)
3401100100001250005
(43-71),(29-33)
3401100100001250006
(1-45),(28-46)
3401100100001350001
(47-61),(48-66)
3401100100001350002
3401100100001350003
75,77
3401100100001410002
403871
(20-22),(34-40),(55-67)
3401100100001410003
21
3401100100001410004
3,5,6,8
3401100100001470001
68-70,57-67
3401100100001470002
(43-93),(42-90)
3401100100001510001
(2-40),(3-41)
3401100100001510002
(4-8),(1-13)
3401100100001530001
(14-86),(15-85)
3401100100001530002
3401100100001540001
(14-70),(11-47)
3401100100001540002
3401100100001730001
(5-25),1,2,4
3401100100001730002
3401100100001740001
(36-70),(47-77)
3401100100001740002
(16-24),7,21,25
3401100100001790001
(30-96),(31-95)
3401100100001790002
(13-17),(6-14)
3401100100001800001
(30-64),(31-93)
3401100100001800002
3401100100001820001
3401100100001820002
(3-43),(36-96)
3401100100001840001
(45-109),(98-162)
3401100100001840002
(14-122),(7-109)
3401100100001870001
(119-173),(124-168)
3401100100001870002
25,33,38,43,45
3401100100001940001
(26-74),(51-75)
3401100100001940002
(95-103),(102-114),(25-45),(8-22)
3401100100001940003
(11-59),(6-80)
3401100100002000001
(61-125),(84-130)
3401100100002000002
(35-87),(34-100)
3401100100002010001
(21-33),(14-32),13
3401100100002010002
(37-57),(32-34)
3401100100002040001
(19-69),(20-88)
3401100100002050001
(92-226),(95-253)
3401100100002050002
(1-9),(15-17)
3401100100002090001
18,19-31
3401100100002090002
(38-100),(27-81)
3401100100002100001
(16-36),25
3401100100002100002
(156-164),168
3401100100002140001
(71-113),(98-154)
3401100100002140002
(56-96),(49-67)
3401100100002140003
(11-27)
3401100100002820001
(84-94),9,9
3401100100002820002
(1-7),(46-78)
3401100100002820003
31-999
3401400100000070001
404354
3458
3413
18224501000
3401400100000070002
404353
1-23,28-999
3401400100000650001
(1-35),(2-54)
3401500100000210001
403805
3414
18226501000
(37-47),(56-70)
3401500100000210002
403801
(1-85)
3401500100000250001
87-117
3401500100000250002
1-77
3401500100000270001
78-126
3401500100000270002
3401500100000370001
23-196
3401500100000370002
403802
3401500100000560001
(46-94),(45-145)
3401500100000560002
146-174
3401500100000560003
3401500100000580001
7,9-45
3401500100000580002
3401500100000660001
(65-139),(70-242)
3401500100000660002
(1-113),(2-72)
3401500100000760001
(164-310),(207-393)
3401500100000760002
(115-205),(74-162)
3401500100000760003
3403000002400080001
404446
3430
18253557000
3403000002400150001
44-999
3403000100000080001
404412
18253501000
(1-43),(2-42)
3403000100000080002
404415
3403000100000090001
(37-999),(46-999)
3403000100000090002
3403000100000100001
404411
3403000100000160001
1-156
3403000100000220001
3403000100000250001
26-999
3403000100000250002
3403000100000370001
3403000100000420002
3403000100000510001
(7-17)
3403000100000510002
3403000100000530001
(13-999),(26-999)
3403000100000530002
3403000100000550001
(29-33),(34-38)
3403000100000550002
3403000100000660001
(15-183),(34-178)
3403000100000660002
(185-999),(180-999)
3403000100000660003
(7-21),(4-22),1
3403000100000690002
25,24
3403000100000690003
(17-29),(18-32),45-999
3403000100000710001
(1-63),(2-62)
3403000100000740001
(65-999),(64-999),62
3403000100000740002
404414
(1-143),(2-142)
3403000100000810001
(145-999),(144-999)
3403000100000810002
3403000100000870001
(1-45),(6-40)
3403000100000870002
404413
3403000100000870003
(1-57),(2-54)
3403000100000880001
(59-999),(56-999),52,54
3403000100000880002
3403000100000970001
3403000100000970002
(1-51),(2-48)
3403000100001000001
3403000100001170001
(29-225),(30-144)
3403000100001170002
(227-393),(146-250)
3403000100001170003
61,63,65
3403000100001360001
(1-59),(2-62)
3403000100001360002
(1-23),(2-28)
3403000100001520001
(25-999),(30-999)
3403000100001520002
(1-13),(2-58)
3403000100001530001
(15-999),(60-999)
3403000100001530002
3403100100000120001
403113
3457
3438
18425000000
(1-15),2,2
3403100100000170001
403115
3403100100000170002
3403100100000410001
(71-185),(42-98)
3403100100000490001
(1-69),(2-40)
3403100100000490002
(1-27),(4-38)
3403100100000530001
(1-45),(2-44)
3403100100000850001
(47-87),(48-94)
3403100100000850002
(1-11),(2-12)
3403100100000970001
(1-43),(2-26)
3403100100000990001
403116
(3-13),(2-10)
3403100100001130001
(1-15),(2-68)
3403100100001140001
(17-81),(70-146)
3403100100001140002
403114
(83-89),(148-156)
3403100100001140003
(1-29),(2-42)
3403100100001160001
(31-111),(44-124)
3403100100001160002
3403100100001350001
(1-17),(2-68)
3403100100001350002
(1-65),(2-70)
3403100100001450001
(67-123),(72-126)
3403100100001450002
(29-77),(22-62)
3403100100001490001
403111
(3-27),(2-20)
3403100100001490002
(1-67),(2-64)
3403100100001510001
(69-149),(66-144)
3403100100001510002
(1-15),(2-18)
3403100100001610001
(1-61),(4-54)
3403100100001650001
(63-131),(56-128)
3403100100001650002
(1-27),(2-8)
3403100100001670001
(1-67),(2-56)
3403100100001900001
(69-129),(58-122)
3403100100001900003
(18-30)
3403100100001940002
(1-27),(2-24)
3403100100002050001
(29-61),(28-68)
3403100100002050002
(1-17),(2-10)
3403100100002060001
(1-57),(2-44)
3403100100002160001
1,2,6
3403100100002220001
(3-83)
3403100100002220002
(1-73),(2-56)
3403100100002240001
(1-73),(2-26)
3403100100002250001
(75-97),(28-62)
3403100100002250002
(1-45),(2-64)
3403100100002270001
(47-999),(66-999)
3403100100002270002
3403100100002300001
(20-46),(47-97)
3403100100002300002
403112
(19-41),86-118
3500000200000150001
162603
3528
19430000000
15-31
3500000200000230001
162612
(39-75)
3500000200000240001
162623
3500000200000240002
162616
3500000200000240003
162618
(1-19),(6-46)
3500000200000410001
162602
(48-52),(41-55)
3500000200000410002
162606
3500000200000430001
162604
3500000200000430002
162625
(16-56),(15-27)
3500000200000470001
162614
(4-14),(1-13)
3500000200000470002
3500000200000580001
77-121
3500000200000620001
162622
(1-15),(2-24)
3500000200000620002
(1-19),(6-30)
3500000200000800001
162601
(23-53),32
3500000200000800002
162624
11,25
3500000200000820001
43-71
3500000200000820002
72-78
3500000200000820003
(25-45),(46-70)
3500000200000970001
3500000200000970002
(35-79),84-120
3500000200000990001
(34-54),(1-31)
3500000200000990002
(56-82)
3500000200000990003
(39-123),(44-80)
3500000200001030001
(104-142),(129-173)
3500000200001030002
162610
(2-36),(1-35)
3500000200001030003
3500000200001030004
2-16,17-19
3500000200001090001
162611
(31-57),(20-40)
3500000200001090002
(1-25),(2-20)
3500000200001100001
(51-57)
3500000200001120001
3500000200001120002
(22-40),(44-100),(59-99)
3500000200001120003
7,8,10-39,41,43-50,51-99
3500000200001170001
3500000200001170002
3500000200001280001
3500000200001280002
3500000200001410001
25-37
3500000200001410002
3-23
3500000200001410003
3500000200001430001
2,5-99
3500000200001430002
20-52
3500000200001470001
3500000200001470002
1-99
3500000200001510001
22,28/6
3500000200001510002
(1-9),(2-50)
3500000200001520001
(15-39),(52-58)
3500000200001520002
(161-195),(170-172)
3500000200001520003
85,87,91,91
3500000200001520004
(120-168)
3500000200001520005
(174-210)
3500000200001520006
(94-118)
3500000200001520007
(16-34),(21-35)
3500000200001560001
28-32
3500000200001630001
162626
64
3500000200001630002
162609
(58-126),(59-133)
3500000200001740002
(1-57),(2-56)
3500000200001740003
3500000200001760001
(1-33),(2-38)
3500000200001760002
22-46
3500000200001780001
54-60,49-51,73
3500000200001780002
68-80
3500000200001780003
3500000200001800001
(10-20)
3500000200001800002
(32-38),(19-49)
3500000200001800003
3500000200002110001
3500000200002110002
3500000200002110003
(12-26)
3500000200002110004
(28-46)
3500000200002110005
23,24,29
3500000200002210001
39,43,45,65-89
3500000200002230001
40-58
3500000200002230002
3600000100000100001
394026
3662
20401370000
3600000100000100002
394016
(1-49),(2-64)
3600000100000110001
394024
(113-285),(104-234),258,264,270
3600000100000110002
3600000100000110003
394049
(59-111),(66-102)
3600000100000110004
394068
(1-17),(2-8)
3600000100000130001
394053
(19-33),(10-26)
3600000100000130002
394077
(35-999),(28-998)
3600000100000130003
394005
24-44
3600000100000150001
394004
3663
20401375000
4-22
3600000100000150002
394029
3600000100000200001
394028
3600000100000200002
394076
(21-83),(24-82)
3600000100000200003
394072
3600000100000240001
394035
3666
20401390000
(15-999),(26-998)
3600000100000240002
394036
1,2,5
3600000100000350001
3600000100000350002
394088
3600000100000670001
(37-999),(44-998)
3600000100000670002
394018
1,1,3,3,5
3600000100000690001
394006
3665
20401385000
2,4,6-999
3600000100000690002
3664
20401380000
(1-59),(2-10)
3600000100000700001
(61-223),(12-122)
3600000100000700002
(128-176)
3600000100000700003
1-15,17,19,21,23
3600000100000730001
(16-998),(25-999)
3600000100000730002
3600000100001100001
394007
1,5
3600000100001100002
394002
(2-10),(3-39)
3600000100001160001
25,31,33,35,(12-66),(41-55)
3600000100001160002
394071
1-31,68
3600000100001290001
394061
(49-73),(70-78)
3600000100001290002
(1-111),(2-96)
3600000100001320001
(113-127),(100-116)
3600000100001320002
1,3,8
3600000100001510001
394030
6,(38-998),(17-999)
3600000100001510002
39,(30-998),(47-51)
3600000100001550001
(1-33),(2-28)
3600000100001550002
3600000100001620001
(16-38),(43-999)
3600000100001620002
1,1,(2-14)
3600000100001700001
3600000100001700002
394055
(3-19),(16-998)
3600000100001700003
1-17,19,21,23
3600000100001770001
394019
(18-26),25,27,29
3600000100001770002
3600000100001840001
3600000100001840002
394033
1-3,8
3600000100001860001
3600000100001860002
3600000100001910001
394051
3600000100001910002
394062
(22-998)
3600000100001910003
394065
(1-5),(2-12)
3600000100001950001
(7-999),(14-998)
3600000100001950002
3600000100002120001
(9-13),(8-12)
3600000100002120002
394031
3600000100002180001
(1-83),(2-68)
3600000100002180002
394052
3600000100002310001
(27-999),(28-998)
3600000100002310002
(1-39),(2-36)
3600000100002320001
(41-47),(38-46)
3600000100002320002
92-999
3600000100002490001
3600000100002490002
394042
3661
20401365000
3600000100002490003
(85-91)
3600000100002490004
3600000100002610001
394038
31-79
3600000100002610002
3600000100002610003
3600000100002620001
3600000100002620002
3600000100002650001
17/2
3600000100002650002
3600000100002760001
(25-33),(16-26)
3600000100002760002
24,(1-23),(2-20)
3600000100002770001
22,25-45
3600000100002770002
(2-32),(74-88),(1-25),27
3600000100003090001
(27-69),90
3600000100003090003
(52-62),(68-72),26,28,53,42,44
3600000100003090004
3600000100003090005
(2-38),(1-15)
3600000100003250001
(53-75),(126-150)
3600000100003250002
1-23,(25-33)
3600000100003270001
(24-32),34-999
3600000100003270002
3600000100003310001
,
3600000100003310002
(1-15),(2-38)
3600000100003440001
394057
(21-999),(40-998)
3600000100003440002
394044
1-52,(54-72),(59-75),77-999
3600000100003540001
53,55,57,74,76
3600000100003540002
(1-83),(2-92)
3600000100003560001
(85-999),(94-998)
3600000100003560002
2,4,26,28
3600000100003650001
3600000100003650002
(1-35),(2-36)
3600000100003710001
(37-999),(38-998)
3600000100003710002
3600000100003810001
42,44
3600000100003810002
44,(29-999),(32-40),(46-998)
3600000100003810003
3600000100003870001
394000
(50-66),(84-998),(33-41),(51-999)
3600000100003870002
(17-31),(28-48)
3600000100003870003
(43-49),(68-82)
3600000100003870004
(1-7),(2-8),13
3600000100003900001
(9-11),(15-23),(10-18)
3600000100003900002
(1-33),(2-44)
3600000100004080001
46-62
3600000100004080002
(2-12),(3-13)
3600000100004090001
394014
(14-34),(17-25)
3600000100004090002
394008
3600000100004210001
2,14,22,24,(21-31)
3600000100004210002
18,30,33,35
3600000100004210004
(1-45),(2-54)
3600000100004240001
(47-231),(56-216)
3600000100004240002
3600000100004300001
3600000100004300002
1-65,67,69,71,73-999
3600000100004380001
66,68,70,72
3600000100004380002
3600000100004510001
(29-33),(24-32)
3600000100004510002
10,12,17
3600000100004580001
3600000100004580002
3600000100004640001
(17-35),(12-26)
3600000100004640002
3600000100004680002
8,8,8,9-15
3600000100004680004
3600000100004690001
394043
86,86
3600000100004690002
3600000100004700001
(3-29),(2-50)
3600000100004700002
(31-47),(84-124)
3600000100004700003
(55-59),(126-140)
3600000100004700004
3600000100004700005
1,1
3600000100004700006
3600000100004730001
(97-117),(94-122)
3600000100004730002
(1-33),(6-22)
3600000100004730003
(35-69),(24-66)
3600000100004730004
(71-95),(68-92)
3600000100004730005
(124-154),(121-137)
3600000100004730006
119
3600000100004730007
(139-199),(162-168)
3600000100004730008
394063
(203-227),184
3600000100004730009
394021
3600000100004750001
(15-49),(12-34)
3600000100004750002
(3-63),(42-46),69
3600000100004860001
3600000100004860002
(50-80),(65-105)
3600000100004860003
(1-81),(2-64)
3600000100004970001
(83-115),(66-118)
3600000100004970002
394087
50,51
3600000100005100001
3600000100005100002
3600000100005240001
(21-61),(18-82)
3600000100005240002
(63-71),(84-116)
3600000100005240003
3600000100005280001
(41-999),(36-998)
3600000100005280002
(12-56),(1-55),(58-80),(59-999)
3600000100005320001
(82-998),57
3600000100005320002
3,(2-10)
3600000100005320003
3600000100005350001
3600000100005350002
3600000100005380001
(21-33),(30-40)
3600000100005380002
3600000100005500001
(16-999),36,74
3600000100005500002
(54-72),(76-84),40,42,44
3600000100005500003
3600000100005520001
3600000100005520002
73,85,90
3600000100005580001
3600000100005580002
(84-998)
3600000100005630001
(129-149)
3600000100005630002
(151-155),154,179,181,185,150
3600000100005630003
394066
40
3600000100005630004
(91-95)
3600000100005630005
(1-21),(2-38)
3600000100005630006
(23-89),(42-82)
3600000100005630007
(97-127)
3600000100005630008
3600000100005850001
13-21
3600000100005850002
394074
(1-25),(8-28)
3600000100005870001
25,(27-999)
3600000100005870002
(30-998)
3600000100005870003
122,124
3600000100005920001
(1-73),(2-120)
3600000100005920002
(1-21),(2-32)
3600000100005950001
(29-999),(34-998)
3600000100005950002
(1-119),(2-126)
3600000100005970001
(121-999)
3600000100005970002
(27-61),86,90
3600000100006040001
394090
(1-25),(2-82)
3600000100006040002
3600000100006260001
64,(59-73),(24-50)
3600000100006260002
(52-94),(75-119)
3600000100006260003
3600000100006400001
37-999
3600000100006400002
3600000100006400003
3600000100006460001
3600000100006460002
3600000100006530001
(2-54),64,68
3600000100006530002
(1-45),(2-999)
3600000100006540001
(53-67)
3600000100006540002
3600000100006580001
56
3600000100006580002
3600000100006630001
(47-61),(62-76)
3600000100006630002
(2-24),(5-7)
3600000100006690001
(26-60),(11-51)
3600000100006690002
(1-139),(2-88)
3600000100006800001
(141-165)
3600000100006800002
3600000100006800003
(1-13),(2-6)
3600000100006860001
(8-998),(15-999)
3600000100006860002
3600000100006870001
13,17,17,17,19,25-999
3600000100006870002
3600000100006930001
3600000100006930002
(20-998)
3600000100006930003
3600000100006930004
3600000100006970001
(1-23),(4-36)
3600000100006970002
3600000100006970003
(1-67),(2-40)
3600000100007060001
(69-999),(42-999)
3600000100007060002
(1-47),(20-62)
3600000100007090001
(49-83),(64-102)
3600000100007090002
(1-17),(2-28)
3600000100007420001
(19-25),(30-42)
3600000100007420002
3600000100007440001
6,8-999
3600000100007440002
3600000100007440004
3600000100007480001
3600000100007480002
3600000100007510001
(47-79),(48-86)
3600000100007510002
(81-999),(88-998)
3600000100007510003
1-22,(24-42)
3600000100007660001
(39-85),86-999
3600000100007660002
3600000100007660003
(44-84)
3600000100007660004
1-12,(14-30)
3600000100007700001
(32-998),(13-999)
3600000100007700002
(1-79),(2-10)
3600000100007750001
(87-121)
3600000100007750002
41,(46-56)
3600000100007780001
(1-39),(2-16),(30-44)
3600000100007780002
53,55,61,73,41,(58-90)
3600000100007780003
(18-28)
3600000100007780004
1,(2-10)
3600000100007840001
(11-51),(20-52)
3600000100007840002
3600000100007840003
(79-89)
3600000100008020001
(1-45),(2-16)
3600000100008020002
22,24,(55-59),73,77
3600000100008020003
(28-998),(65-77)
3600000100008020004
3600000100008050001
(65-91)
3600000100008050002
3600000100008170001
3600000100008170002
20,29,31
3600000100008240001
3600000100008240002
(1-21),2,4,6
3600000100008430001
(23-35),(8-14)
3600000100008430002
(37-105),(16-64)
3600000100008430003
(7-99),(22-92)
3600000100008530001
1,3,7/9
3600000100008530002
1,2,4
3600000100008560001
3600000100008560002
3600000100008590001
(21-999),(20-998)
3600000100008590002
1,(2-48),54,69
3600000100008610001
85,(90-102)
3600000100008610002
27,54
3600000100008610003
394064
(1-17),(2-20),24
3600000100008660001
(29-35),(22-36)
3600000100008660002
3600000100008960001
(9-999),(24-998)
3600000100008960002
3600000100008990001
3600000100008990002
(1-37),(2-34)
3600000100009020001
(111-157),(50-998)
3600000100009020002
39,(59-109),(36-48)
3600000100009020003
2,29,(31-999),(42-999)
3600000100009050001
(1-29),(2-40)
3600000100009050002
2,(4-92),(7-69),118
3600000100009170001
75,(135-153),(120-128)
3600000100009170002
2,4,3,5
3600000100009170004
1-38,(40-52)
3600000100009390001
(58-998),(39-999)
3600000100009390002
3600000100009390003
3600000100009390004
(1-77),(12-68)
3600000100009490001
394010
16,(2-10)
3600000100009490002
(88-998),(109-999)
3600000100009520001
(52-86)
3600000100009520002
(3-41),(2-50)
3600000100009520003
(83-107)
3600000100009520004
3600000100009590001
(5-17),(8-14)
3600000100009590002
121,(46-84),(123-129)
3600000100009610001
(29-121)
3600000100009610002
(5-27),(12-28)
3600000100009610003
(86-106),(131-187)
3600000100009610004
2,4,8,(1-3)
3600000100009610005
(1-107),(2-132)
3600000100009640001
(109-173),(160-196)
3600000100009640002
(1-77),(2-82)
3600000100009700001
(79-149),(84-140)
3600000100009700002
(1-73),(18-58)
3600000100009730001
(75-999),(60-998)
3600000100009730002
3600000100009770001
3600000100009770002
3600000100009790001
(19-93),(12-94)
3600000100009790002
3600000100009970001
(55-93),(109-999),(58-998)
3600000100009970002
3600000100010030001
(33-81),105,107,(38-66)
3600000100010030002
(164-999)
3600000100010030003
(15-999),(40-998)
3600000100010130001
394086
3600000100010130002
3600000100010130003
(81-231),233,233,233
3600000100010220001
(70-998),289
3600000100010220002
3600000100010220003
(42-68),(49-79)
3600000100010220004
1,2,4-8,10
3600000100010590001
3,(9-15)
3600000100010590002
(87-99),(86-98)
3601500100000200001
397902
3652
20221501000
3601500100000200002
397903
(45-85),(46-84)
3601500100000200003
397907
(131-261),(98-260)
3601500100000310001
397909
(1-129),(2-96)
3601500100000310002
397901
(1-43),(2-52)
3601500100000590001
397900
(45-199),(54-200)
3601500100000590002
397904
3601500100000670001
397910
3601500100000670002
(1-59),(2-30)
3601500100000810001
(32-120),(61-199)
3601500100000810002
17,43,45,47,60,66
3601500100001220001
(1-15),(19-41),(2-54)
3601500100001220002
53,56-99
3601500100001850001
3601500100001850002
(1-49),(2-62)
3601500100001910001
(53-75),66,68,76,86
3601500100001910002
1-29,32-66
3601500100001930001
3601500100001980001
3614
3601500100001980002
3601500100002030001
(1-49),(2-52)
3601500100002030002
1,2,4-67
3601500100002120001
2,2,3
3601500100002120002
397908
68-150
3601500100002120003
(1-11),(2-12),16
3600000300000160001
396070
3616
3651
20427000000
3600000300000160002
396072
3600000300000210001
(14-998),
3600000300000210002
3600000300000430001
(9-999),
3600000300000430002
396071
(79-87)
3600200000100100001
396250
3601
20202551000
(1-77),(2-60)
3600200000100100002
396251
(62-260),(89-261)
3600200000100100003
396252
(2-228),(1-197),(203-243)
3600200000100500001
13,13
3600200000100500002
396253
(2-34),(1-999)
3600300004900200001
397740
3602
20204848001
(36-108)
3600300004900200002
397741
3600300100000110001
397702
20204501000
(252-376),(199-273)
3600300100000110002
397704
(378-444),(275-339)
3600300100000110003
397705
(104-250),(79-197)
3600300100000110004
397706
(128-146),(71-111)
3600300100000150001
397700
(2-100),(1-69)
3600300100000150002
(80-166),(57-181)
3600300100000160001
397701
(2-58),(1-55)
3600300100000160002
(2-88),(1-19)
3600300100000270001
(92-206),(21-83)
3600300100000270002
(2-114),(1-85)
3600300100000300001
(116-266),(87-211)
3600300100000300002
(30-134),(45-101)
3600300100000320001
(2-28),(1-43)
3600300100000320002
3600300100000330001
3600300100000330002
3600300100000340001
(92-246),(65-199)
3600300100000340002
(4-74),(5-83)
3600300100000350001
(106-110),(113-133)
3600300100000350002
(76-100),(85-111)
3600300100000350003
(2-10),(1-17)
3600300100000400001
3600300100000400002
(24-38),(39-77)
3600300100000450001
(2-22),(1-33)
3600300100000450002
(76-126),(85-113),163
3600300100000480001
(2-74),(1-83)
3600300100000480002
(1-45),(127-143)
3600300100000510001
(2-96),(51-125)
3600300100000510002
(2-16),(1-17)
3600300100000560001
(18-48),(19-65)
3600300100000560002
(24-114),(21-101)
3600300100000590001
(2-20),(1-19)
3600300100000590002
(38-124),(39-103)
3600300100000680001
(2-36),(1-37)
3600300100000680002
(168-190),(155-179)
3600300100000680003
(126-166),(105-153)
3600300100000680004
(2-78),(1-89)
3600300100000730001
(236-288),(221-255)
3600300100000730002
(80-234),(91-219)
3600300100000730003
(2-14),(1-41)
3600300100000740001
(20-198),(43-67)
3600300100000740002
(2-102),(1-81)
3600300100000840001
(104-148),(83-109)
3600300100000840002
(2-146),(1-151)
3600300100000940001
(148-998),(153-999)
3600300100000940002
(132-998),(71-999)
3600300100000960001
(2-130),(3-69)
3600300100000960002
(60-78),(29-59)
3600300100001010001
(2-58),(1-27)
3600300100001010002
3600500100000020001
397160
3604
20410000000
(2-64),(23-69)
3600500100000020002
397163
68,71
3600500100000020003
397167
(96-298),(57-243)
3600500100000030001
397164
(2-94),(1-55)
3600500100000030002
397166
300,245
3600500100000030003
397172
(1-163),(2-184)
3600500100000040001
163,184
3600500100000040002
(1-47),(2-46)
3600500100000110001
46,49,76
3600500100000110002
3600500100000360001
3600500100000360002
3600500100000580001
(37-73),(50-64)
3600500100000580002
(1-79),(2-78)
3600500100000600001
80,81
3600500100000600002
3600500100000830001
23-51
3600500100000830002
(1-65),(2-62)
3600500100000850001
(67-95),(64-94)
3600500100000850002
3600500100000940001
(13-29),(20-46)
3600500100000940002
(1-155),(2-160)
3600500100001000001
157,162,206
3600500100001000002
(8-218),(5-229)
3600500100001110001
(220-320)
3600500100001110002
(1-59),(2-78)
3600500100001130001
(61-75),(80-116)
3600500100001130002
109,118,154-156
3600500100001130003
397165
(77-103),(120-142)
3600500100001130004
3600500100001160001
75,(58-72)
3600500100001160002
3600500100001230001
(35-151),(44-146)
3600500100001230002
(2-84),(1-37),(89-113)
3600500100001420001
(86-100),(39-87),(115-211)
3600500100001420002
(213-245),(102-122)
3600500100001420003
(1-125),(2-132)
3600500100001510001
129,136-179
3600500100001510002
(1-49),(2-60)
3600500100001540001
(51-63),(66-72)
3600500100001540002
(1-29),(2-58)
3600500100001550001
3600500100001550002
95,102
3600500100001600001
(1-93),(2-100)
3600500100001600002
(2-106),(3-133)
3600500100001640001
(108-136)
3600500100001640002
44,92,(96-128)
3600500100001730001
(1-42),(2-90)
3600500100001730002
86,88,90,(91-101)
3600500100001900001
3600500100001900002
3600500100001970001
(52-58),(45-59)
3600500100001970002
(2-62),(1-43)
3600500100002010001
(47-59)
3600500100002010002
(107-313),(120-206)
3600500100002100001
(208-234)
3600500100002100002
(1-105),(2-118)
3600500100002100003
(1-71),(2-78)
3600500100002160001
(73-153),(80-164)
3600500100002160002
(1-69),(2-58)
3600500100002180001
(71-153),(60-134)
3600500100002180002
(2-82),(1-117)
3600500100002200001
84,119-123
3600500100002200002
397171
3600500100002270001
7-19
3600500100002270002
(1-127),(2-120)
3600500100002540001
122,129,182
3600500100002540002
(1-69),(2-16)
3600500100002730001
(71-141)
3600500100002730002
(1-117),(2-120)
3600500100002910001
119,(122-164)
3600500100002910002
(1-83),(2-102)
3600600100000010001
397500
3629
3605
20208501000
(85-243),(104-316),102
3600600100000010002
397502
(81-257),(40-192)
3600600100000020001
(1-79),(2-38)
3600600100000020002
397505
(43-53),(48-64)
3600600100000170001
3600600100000170002
3600600100000370001
397501
(16-64),(37-63)
3600600100000370002
397504
(72-190)
3600600100000420001
(2-70),(1-231)
3600600100000420002
397506
(2-124),(1-107)
3600600100000540001
(126-278),(109-253)
3600600100000540002
3600600100000570001
3600600100000570002
(158-268),(127-239)
3600600100000810001
(2-156),(1-125)
3600600100000810002
(34-140),(33-89)
3600600100000850001
(1-31),(2-32)
3600600100000850002
(1-9),(2-24)
3600600100001120001
(11-45),(26-46)
3600600100001120002
(1-55),(2-58)
3600600100001230001
(57-163),(60-182)
3600600100001230002
3600600100001490001
3600600100001490002
3600700000300130001
396466
3620
3606
20210808001
101-179
3600700000300130002
396467
3600700000300150001
6-31
3600700000300150002
3600700000600010001
396465
20210816001
(1-117),(2-154)
3600700000600080001
3600700000700010001
396464
20210820001
(119-999),(156-998)
3600700000700040001
(1-289),(2-426)
3601000000100920001
397240
3609
20213551000
(295-343),(428-528)
3601000000100920002
397241
3601400000100210001
396350
3613
20220814001
3601400000100210002
396351
(1-49),(2-50)
3601800004700390001
397440
3617
20227563000
(51-999),(52-998)
3601800004700390002
397441
3601800004700540001
(9-999),(8-998)
3601800004700540002
(1-69),(2-64)
3601800100000130001
397400
20227501000
(71-999),(66-998)
3601800100000130002
397401
3601800100000150001
(55-999),(78-998)
3601800100000150002
(1-95),(2-76)
3601800100000300001
(97-999),(78-998)
3601800100000300002
(2-44),(1-93)
3601800100000500001
(46-998),(95-999)
3601800100000500002
(1-55),(2-74)
3602100002800300001
396431
20233840001
74,(76-156),(57-91)
3602100002800300002
396432
(1-73),(2-52)
3602100002800330001
(54-156),(75-211)
3602100002800330002
3602400001300080001
397340
3623
20239824001
(35-999),(38-998)
3602400001300080002
397342
(1-111),(2-88)
3602400001300210001
(113-151)
3602400001300210002
(1-61),(2-44)
3602400001300480001
397341
(63-255),(46-250)
3602400001300480002
(257-999),(252-998)
3602400001300480003
(1-9),(2-14)
3602400001300500001
(11-163),(16-114)
3602400001300500002
(165-999),(116-998)
3602400001300500003
(1-67),(2-80)
3602400100000010001
397354
20239501000
(69-999),(82-998)
3602400100000010002
397350
3602400100000070001
3602400100000070002
3602400100000180001
13,15,17,(20-26)
3602400100000180002
3602400100000190001
30,33,35
3602400100000190002
3602400100000320001
11,13,15
3602400100000320002
3602400100000380001
21,25,27,(24-32)
3602400100000380002
(2-68),(1-81)
3602400100000440001
(70-998),(83-999)
3602400100000440002
62-999
3602400100000490001
(1-61),(2-58)
3602400100000490002
(115-999),(102-998)
3602400100000550001
(1-113),(2-100)
3602400100000550002
(95-999),(108-998)
3602400100000700001
(1-93),(2-106)
3602400100000700002
3602400100000730001
20,21,23
3602400100000730002
3602400100000760001
13,15,(28-36)
3602400100000760002
3602400100000810001
3602400100000810002
3602400100000830001
3602400100000830002
397355
3602400100000860001
3602400100000860002
3602400100001030001
10,12,15,17
3602400100001030002
(1-79),(2-74)
3602800100000020001
396651
3627
20247501000
(81-115),(76-108)
3602800100000020002
396655
(24-30),33,35,49,50
3602800100000200001
3602800100000200002
396650
3602800100000240001
3602800100000240002
396658
(1-9),(2-4)
3602800100000410001
(11-49),(6-50)
3602800100000410002
3602800100000470001
114
3602800100000470002
396656
12/1,12/2,(1-19),(2-10)
3602800100000540001
19 ,37,(12-38)
3602800100000540002
12,14
3602800100000550001
8,10
3602800100000550002
(5-85),(6-88)
3602800100000750001
3602800100000750002
3602800100000800001
(21-53),(22-54)
3602800100000800002
(1-75),(2-64)
3602800100000870001
(77-97),(68-72)
3602800100000870002
3602800100000940001
(3-79),(4-58)
3602800100000940002
(1-79),(2-46)
3602800100000950001
(83-101)
3602800100000950002
(1-59),(2-70)
3602800100001080001
(61-115),(72-134)
3602800100001080002
(166-390)
3602800100001110001
396653
(1-97),(2-164)
3602800100001110002
3602800100001140001
(1-21),(6-48)
3602800100001140002
(3-19),
3602800100001200001
(21-29)
3602800100001200002
(1-75),(2-70),74
3602800100001260001
(77-165),(76-140),48
3602800100001260002
2,30
3602800100001320001
(1-47),(2-10)
3602800100001320002
396659
3602800100001380001
(25-55),(22-58)
3602800100001380002
6,13,15
3602800100001540001
3602800100001540002
(177-255),(174-250)
3602800100001650001
(103-175),(98-172)
3602800100001650002
(61-155),(88-164)
3602800100001710001
(1-59),(2-72)
3602800100001710002
(1-39),(2-30)
3602800100001880001
(41-141),(32-110)
3602800100001880002
2 ,2¡
3602800100001930001
2,(1-5)
3602800100001930002
(115-183),(200-308)
3602800100002080001
3602800100002120001
(19-61),(20-74)
3602800100002120002
(1-19),(2-14)
3602800100002300001
(21-83),(16-86)
3602800100002300002
2,3,20,36,(42-80)
3602900100000010001
396900
3628
20249501000
(10-14)
3602900100000010002
396902
(2-64),(3-37)
3602900100000440001
(39-45),(68-72)
3602900100000440002
(8-12)
3602900100000480001
3602900100000480002
50-56
3602900100000560001
1-49,57-79
3602900100000560002
396901
23,29,31,47,(63-85),(122-132)
3602900100000570001
1-22,(24-104)
3602900100000570002
(1-5),(2-6)
3602900100000670001
(7-999),(8-998)
3602900100000670002
(6-20),(3-19)
3603000000100080001
397480
20251551000
(22-36),(21-31)
3603000000100080002
397482
(2-30),(1-39)
3603000000100160001
(32-50),(41-55)
3603000000100160002
397481
(2-158),(1-153)
3603000000100170001
(160-236),(155-215)
3603000000100170002
(2-138),(1-157)
3603000000100200001
(140-202),(159-211)
3603000000100200002
(2-102),(1-95)
3603000000100290001
(104-172),(97-161)
3603000000100290002
(2-130),(1-137)
3603000000100330001
(132-352),(139-387)
3603000000100330002
(2-26),(1-25)
3603000000100360001
(28-50),(27-53)
3603000000100360002
(66-230),(67-263)
3603000000100370001
3603000000100370002
(232-306)
3603000000100370003
1-155
3603000007100190001
397477
20251860001
156-160
3603000007100190002
397473
3700100012900100001
153521
3711
24207848000
3700100012900100002
(69-89)
3700100012900120001
153520
3700100012900120002
3700100012900130001
3700000100000030001
153020
3702
24401000000
3700000100000030002
153006
(1-27),(2-42)
3700000100000040001
153000
(29-999)
3700000100000040002
153012
20 ,56,58,64,(106-999)
3700000100000040003
153034
3700000100000640001
(23-999),(20-998)
3700000100000640002
3700000100000740001
153003
(29-999),(40-999)
3700000100000740002
153031
(38-999),(43-999)
3700000100000760001
153013
(1-41),(2-36)
3700000100000760002
153008
3700000100001150001
(25-45),(30-50)
3700000100001150002
(47-999),(52-999)
3700000100001150003
(7-999),
3700000100001710001
153022
3700000100001710002
3700000100001780001
153032
(2-999)
3700000100001780002
153035
(23-999),(10-999)
3700000100002060001
153048
(1-21),2,4,6,8
3700000100002060002
(1-59),(2-74)
3700000100002150001
(61-999),(76-999)
3700000100002150002
153015
1,3,(2-10)
3700000100002330001
(5-77),(12-74)
3700000100002330002
(79-999),(76-999)
3700000100002330003
3700000100003110001
19,(22-30)
3700000100003110002
(1-13),(2-26)
3700000100003120001
(15-999),(28-998)
3700000100003120002
3700000100003160001
3700000100003160002
(3-47),(26-50)
3700000100003250001
(49-999),(52-999)
3700000100003250002
(1-33),(2-30)
3700000100003320001
(35-999),(32-998)
3700000100003320002
153021
3700000100003340001
(51-999),(40-998)
3700000100003340002
3700000100003380001
3700000100003380002
(1-131),(2-122)
3700000100003560001
(133-999),(124-998)
3700000100003560002
3700000100003570001
3700000100003570002
153027
3700000100003590001
(27-999),(26-998)
3700000100003590002
3700000100003600001
3700000100003600002
4,6,10
3700000100003790001
(1-999),2,8,(12-998)
3700000100003790002
3700000100003970001
58,(76-999)
3700000100004020001
3,2
3700000100004020002
(5-47),(16-62)
3700000100004020003
(51-137),7,(141-149)
3700000100004020004
(21-69)
3700000100004500001
3700000100004500002
153009
(1-19),(2-56)
3700000100004500003
(71-999),(98-998)
3700000100004500004
153038
(1-43),(2-40)
3700000100004510001
(45-63),(42-54)
3700000100004510002
(65-999),(56-998)
3700000100004510003
(1-49),(2-46),50
3700000100004530001
(51-999),(82-999)
3700000100004530002
48,(52-60)
3700000100004530003
3700000100004720001
(23-999),(24-998)
3700000100004720002
3700000100004890001
(27-107),(26-114)
3700000100004890002
(116-120)
3700000100004890003
(132-998)
3700000100004890004
(109-157),(122-130)
3700000100004890005
(159-199)
3700000100004890006
(201-999)
3700000100004890007
,(2-22),26
3700000100005370001
153040
3700000100005370002
,(2-14),(28-999)
3700000100005410001
13,(16-26)
3700000100005410002
3700000100005650001
(21-999),(2-998)
3700000100005650002
3700000100005660001
3700000100005660002
(1-45),(2-50)
3700000100006020001
(47-999),(52-998)
3700000100006020002
(1-999),(14-998)
3700000100006320001
3700000100006320002
3700000100006740001
153002
3700000100006740002
153037
3700000100007480001
(1-51),
3700000100007480002
,(32-998)
3700000100007510001
3700000100007510002
,(2-26)
3700000100007540001
3700000100007540002
(1-5),(21-27),22
3700000100007550002
1,21,23,29,41,31,37,39,47,45,26,28,46
3700000100007550003
3700000100007890001
(21-999),(20-999)
3700000100007890002
1,3,5,7,9
3700000100007980001
3700000100007980002
3700000100008020001
(1-999),(34-998)
3700000100008020002
,(2-10)
3700000100008050001
(12-999),(23-999)
3700000100008050002
3700000100008210001
(37-999),(30-998)
3700000100008210002
2,3,5,6
3700000100008340001
20,23,29,33,37,43
3700000100008340002
(1-83),(2-76)
3700000100009080001
(85-999),(78-998)
3700000100009080002
3700000100009210001
(23-999),(22-998)
3700000100009210002
3700000100009350001
3700000100009350002
(1-107),(2-148)
3700000100009390001
(109-999),(150-999)
3700000100009390002
(1-133),(2-120)
3700000100009430001
(135-999),(122-998)
3700000100009430002
123,128,131,133,135
3700000100009440001
3700000100009440002
43,43 ,45,45 ,47,57
3700000100009640001
3700000100009640002
3700000100009800001
3700000100009800002
21,27,(2-50)
3700000100009800003
(29-31),(52-102)
3700000100009800005
(33-43)
3700000100009800006
153011
(45-999),92,98,(104-999)
3700000100009800007
3700000100009960001
3700000100009960002
(15-79),(40-82)
3700000100009970001
(1-13),(2-38)
3700000100009970002
(81-87),(84-88)
3700000100009970004
(89-999),(90-998)
3700000100009970005
(1-3),2,2 ,4,4 ,4¡
3700000100010070001
3¡,3¢,(5-9),4¢,6,8,11 
3700000100010070002
10,26¡,44¡,44¢,46 
3700000100010070003
(11-999),(12-998)
3700000100010070004
3700000100010390001
,(22-998)
3700000100010390002
3700000100010390003
1,3,5,7,(2-30)
3700000100010670001
(9-999),(32-998)
3700000100010670002
(3-47),(2-36)
3700000100010690001
(49-999),(38-999)
3700000100010690002
15,17,19,
3700000100010810002
(47-999),(42-999)
3700000100010830001
(1-45),(2-40)
3700000100010830002
3700000100010840001
3700000100010840002
,(30-999)
3700000100010890001
3700000100010890002
(1-39),(2-34)
3700000100011040001
(41-999),(36-999)
3700000100011040002
,(2-14),(84-999)
3700000100011120001
(16-82)
3700000100011120002
(1-3),(2-10)
3700000100011210001
(5-999),(12-999)
3700000100011210002
,(28-999)
3700000100011270001
3700000100011270002
3700000100012720001
153043
(51-999),(50-999)
3700000100012720002
153007
(17-999),(16-999)
3700000100012760001
(2-14),(11-15)
3700000100012760002
3700000100012770001
(33-999),(32-999)
3700000100012770002
153029
3700000100012820001
(21-999),(26-998)
3700000100012820002
(1-15),(2-32)
3700000100012860001
(17-999),(34-999)
3700000100012860002
2,13
3700000100013010001
3700000100013010002
,(24-999)
3700000100013090001
153030
3700000100013090002
153024
3700000100013150001
3700000100013150002
3700000100013180001
3700000100013180002
3700000100013210001
3700000100013240001
(17-999),8,(18-998)
3700000100013240002
1,
3700000100013310001
3700000100013310002
(1-33),(2-52)
3700000100013350001
(35-999),(54-998)
3700000100013350002
(1-17),(2-40)
3700000100013430001
(19-51),(42-999)
3700000100013430002
3700000100013430003
153025
(1-999),(2-10)
3700000100013540001
(12-998)
3700000100013540002
(1-7),(2-8)
3700000100013610001
(9-999),(10-998)
3700000100013610002
(1-31),(2-8)
3700000100013640001
(10-998),(33-999)
3700000100013640002
3700000100013670001
3700000100013670002
(1-999),
3700000100013700001
60,68
3700000100013700002
3700000100013730001
(39-999),(2-998)
3700000100013730002
3700000100013760001
(43-999),(2-999)
3700000100013760002
,(2-42)
3700000100013790001
(44-999)
3700000100013790002
3700000100013830001
3700000100013830002
(69-999),(84-998)
3700000100013860001
(1-67),(2-82)
3700000100013860002
3700000100014000001
(19-999),(20-998)
3700000100014000002
3700000100014140001
3700000100014140002
3700000100014180001
(17-999),
3700000100014180002
3700000100014270001
3700000100014270002
(57-999)
3700000100014310001
3700000100014310002
3700000100014310003
153005
3700000100014310004
(25-29)
3700100200000390001
153511
24207504000
3700100200000390002
3700100200000390003
3700100200000390004
69
3700100200000390005
38,,ª1,ª2,ª3
3700100200000390006
40,1,2
3700100200000390007
70
3700100200000390008
(53-63)
3700100200000390009
23,
3700100200000390010
(42-50)
3700100200000390011
(58-64)
3700100200000390012
3700300100000150001
155331
3701
24403000000
3700300100000150002
155332
35-999,(21-33)
3700300100000160001
155334
(2-34),(1-19)
3700300100000160002
3700300100001480001
155333
3700300100001480002
(3-19),(4-26)
3700300100001480003
1-55,58
3700300100001520001
155330
56,57,59-999
3700300100001520002
3701500100001220001
155251
24223501000
15-36
3701500100001220002
155252
3701500100001280001
155250
7-52
3701500100001280002
3701500100002020001
1-16,18,20-999
3701500100002020002
3701700100000080001
155048
3704
24229000000
72-87
3701700100000080002
155047
3701700100000940001
3-28
3701700100000940002
(16-38),(21-49)
3701700100001930001
155043
(2-14),(1-19)
3701700100001930002
3701700100002080001
6-35
3701700100002080002
3701700100002120001
7-29
3701700100002120002
3701800100000070001
155520
3705
24231000000
29-148
3701800100000070002
155571
1-25,42-999
3701800100000180001
26-41
3701800100000180002
155524
1-21,43-999
3701800100000450001
22-42
3701800100000450002
1-6,8,10,11,13,15-999
3701800100000660001
155525
7,9,12,14
3701800100000660002
155526
1-81
3701800100000690001
82-109
3701800100000690002
1-21,44-999
3701800100000730001
22-43
3701800100000730002
1-15,17,19-29,31-33
3701800100000890001
16,18,30,34
3701800100000890002
3701800100000970001
63-100
3701800100000970002
1-21,46-999
3701800100001100001
22-45
3701800100001100002
1-32,58-999
3701800100001180001
33-57
3701800100001180002
3701800100001220001
3701800100001220002
1-34,36,39-999
3701800100001320001
35,37,38
3701800100001320002
1-23,73-999
3701800100001360001
24-72
3701800100001360002
1-23,49-999
3701800100001420001
24-48
3701800100001420002
3701800100001440001
3701800100001440002
3701800100001630001
3701800100001630002
3701800100001700001
45-999
3701800100001700002
3701800100001910001
35-999
3701800100001910002
1-22,47-999
3701800100002000001
23-46
3701800100002000002
1-17,25-999
3701800100002340001
18-24
3701800100002340002
86
3701900100000370001
155912
3706
24411000000
(4-82),(3-117)
3701900100000370002
155900
22,(5-21)
3701900100000380001
(23-105),(26-84)
3701900100000380002
155903
(1-75),(2-38),(70-84)
3701900100000390001
(77-123),(124-200),127
3701900100000390002
2,(23-41),61
3701900100000560001
(123-153)
3701900100000560002
(14-20),24,26,(40-52),67,69,107
3701900100000560003
4,12,13,(17-21)
3701900100000570001
(27-57),(16-28),32
3701900100000570002
3701900100000630001
155901
(21-131)
3701900100000630002
155905
(1-5),(2-24)
3701900100001180001
(19-77),(26-84)
3701900100001180002
3701900100001190001
(19-63),(2-36)
3701900100001190002
3701900100001540001
(18-40),(25-41)
3701900100001540002
(2-16),21,21,23
3701900100001540003
17,22,23,24
3701900100002130001
155904
(1-15),(2-12)
3701900100002130002
21,21,23,25,32,34,42
3701900100002140001
3701900100002140002
7,11,13,(2-24)
3701900100002680001
(26-28),(17-31)
3701900100002680002
119,125,125,127
3701900100002790001
155908
36,38,38,53,55,55,57,103,105
3701900100002790002
(39-49),(63-87),32,34,34,34,36,36
3701900100002790003
(4-28),(1-33),(96-106),(107-117)
3701900100002790004
(1-95),(2-62)
3701900100003190001
(64-102),99
3701900100003190002
3701900100003530001
(7-13),37,(43-47),(18-38)
3701900100003530002
(24-72),(19-77)
3701900100003710001
(4-20),(1-15)
3701900100003710002
(1-23),2
3800000300000010001
664002
3810
25401368000
(25-63),
3800000300000010002
664020
(1-17),2,(4-12),(14-24)
3800000300000100001
664054
3812
25401380000
(19-999),2,12,(26-998)
3800000300000100002
664018
3800000300000120001
664009
3849
25401370000
(19-999),(22-998)
3800000300000120002
3808
25401373000
(1-73),(2-30)
3800000300000130001
(75-999),(32-998)
3800000300000130002
3811
(1-103),(2-78)
3800000300000150001
664047
(105-999),(80-998)
3800000300000150002
664075
3800000300000380001
(5-999),
3800000300000380002
165,159,161,(167-195)
3800000300000430001
664081
176,180
3800000300000430002
664031
(1-31),(2-18)
3800000300000430003
664007
(109-129),(118-172)
3800000300000430004
664046
(131-157),159
3800000300000430005
(197-251),161
3800000300000430006
(253-999),(254-998)
3800000300000430007
664050
(33-35),(20-28)
3800000300000430008
(37-107),(30-90)
3800000300000430009
664012
(178-180),(182-252),163,165
3800000300000430010
(92-110)
3800000300000430011
664022
(1-115),(2-48)
3800000300000480001
664001
(117-227),(50-96)
3800000300000480002
664019
3800000300000500001
664013
(95-153),(102-192)
3800000300000500002
664040
(216-998)
3800000300000500003
664053
3800000300000600001
(1-43),(4-26)
3800000300000600002
3800000300000710001
664003
(15-999),(10-998)
3800000300000710002
(1-73),(2-80)
3800000300000900001
(75-999),(82-998)
3800000300000900002
(1-91),(2-116)
3800000300000940001
(93-97),(118-122)
3800000300000940002
3800000300000950001
(13-31),(16-36)
3800000300000950002
(33-999),(38-998)
3800000300000950003
3800000300001080001
3800000300001080002
3800000300001080003
664011
3800000300001180001
664005
(37-67),(46-90)
3800000300001180002
664039
(69-999),(92-998)
3800000300001180003
664074
3800000300001220001
3800000300001220002
(1-7),(2-8),8
3800000300001260001
3800000300001260002
(1-25),(2-46)
3800000300001280001
(27-999),(48-998)
3800000300001280002
(1-25),(2-36)
3800000300001300001
(27-31)
3800000300001300002
(33-37),(38-44)
3800000300001300003
3800000300001320001
(39-67),(64-98)
3800000300001320002
3800000300001380001
664035
(11-999),(14-998)
3800000300001380002
664044
(1-25),(26-56)
3800000300001400001
664026
(27-65)
3800000300001400002
(67-125)
3800000300001400003
3800000300001400004
(58-100)
3800000300001400005
(1-15),(2-46)
3800000300001440001
(25-85),(48-110)
3800000300001440002
3800000300001480001
(25-27),(34-42)
3800000300001480002
(29-39),(44-56)
3800000300001480003
(41-45),(58-70)
3800000300001480004
3800000300001540001
(5-21),(18-40),16
3800000300001540002
3800000300001700001
(127-999),(82-998)
3800000300001700002
(73-125),(34-80)
3800000300001700003
3800000300001700004
664029
(1-33),(2-38),38
3800000300001710001
(35-999),(40-998)
3800000300001710002
(1-999),(2-36)
3800000300001770001
3800000300001770002
(1-11),(2-36)
3800000300002150001
3800000300002150002
666029
3800000300002210001
3800000300002210002
3800000300002250001
(101-223),(110-218)
3800000300002250002
(225-237),(220-224)
3800000300002250003
(239-999),(226-998)
3800000300002250004
(29-99),(34-84)
3800000300002250005
(86-108)
3800000300002250006
3800000300002270001
664015
(1-29),(2-20),(24-28)
3800000300002270002
(31-51),(30-36)
3800000300002270003
(53-999),(38-998)
3800000300002270004
(1-23),(2-34)
3800000300002340001
(25-999),(36-998)
3800000300002340002
3800000300002400001
(39-999),(28-998)
3800000300002400002
(1-67),(2-58)
3800000300002490001
(69-999),(60-998)
3800000300002490002
(1-67),(2-66)
3800000300002510001
(69-999),(72-998)
3800000300002510002
3800000300002640001
3800000300002640002
(1-21),(2-8),10,10
3800000300002650001
(23-55),10,(12-46)
3800000300002650002
(57-83),(48-64)
3800000300002650003
(85-999),(66-998)
3800000300002650004
3800000300002680001
(23-49),(24-34)
3800000300002680002
(51-999),(36-998)
3800000300002680003
(1-83),(2-70)
3800000300002690001
(89-999),(72-998)
3800000300002690002
3800000300002710001
(125-999),(128-998)
3800000300002710002
666009
(17-43),(18-64)
3800000300002710003
(53-123),(66-126)
3800000300002710004
3800000300002890001
3800000300002890003
3800000300002970001
3800000300002970002
1,(3-9),(2-14),(18-38)
3800000300002980001
16
3800000300002980002
664006
1
3800000300002980003
664027
(11-999),(40-998)
3800000300002980004
(1-63),(2-90)
3800000300002990001
(77-999),(104-998)
3800000300002990002
3800000300003020001
(59-91),(74-120)
3800000300003020002
(93-999),(126-998)
3800000300003020003
1-61,61
3800000300003050001
61,(63-105),(100-122)
3800000300003050002
(1-25),31,(4-18),24
3800000300003270001
(27-29),(33-999),20,22,(26-998)
3800000300003270002
3800000300003310001
3800000300003310002
(25-59)
3800000300003310003
(61-85),(28-84)
3800000300003310004
3800000300003310005
3800000300003310006
3800000300003490001
(5-33),(2-16)
3800000300003490002
3800000300003560001
(91-999),(100-998)
3800000300003560002
(1-41),(2-40)
3800000300003570001
(43-999),(42-998)
3800000300003570002
11,12,17
3800000300003590001
664024
(19-25),(18-24)
3800000300003590002
664014
(1-11),(8-20)
3800000300003700001
3800000300003700002
3800000300003730001
27-44
3800000300003730002
11,(13-383),30,(32-156)
3800000300003750001
(1-11),11,(2-30),30
3800000300003750002
3800000300003780001
(57-999),(34-998)
3800000300003780002
(1-999),(10-998)
3800000300003850001
3800000300003850002
3800000300003930001
(39-999),(38-998)
3800000300003930002
3800000300004050001
(17-29),(24-26)
3800000300004050002
3800000300004090001
(37-999),(52-998)
3800000300004090002
3800000300004100001
(31-999),(22-998)
3800000300004100002
(3-69),(2-26)
3800000300004130001
(73-185),(28-114)
3800000300004130002
(1-113),(2-110)
3800000300004190001
(117-211),(112-186)
3800000300004190002
105,109,143
3800000300004230001
3800000300004230002
(147-999),(118-998)
3800000300004230003
(35-47),(34-42)
3800000300004230004
(49-103),107,(111-135),(44-116)
3800000300004230005
(1-51),(2-54)
3800000300004260001
(53-999),(56-998)
3800000300004260002
(1-19),(2-42)
3800000300004300001
(21-999),(44-998)
3800000300004300002
3800000300004370001
3800000300004370002
3800000300004390001
(13-35)
3800000300004390002
3800000300004390003
3800000300004390004
3800000300004390005
(1-39),(2-32)
3800000300004490001
(43-999),(40-998)
3800000300004490002
(1-75),(2-86)
3800000300004560001
(77-999),(88-998)
3800000300004560002
3800000300004590001
(113-323),(118-180)
3800000300004590002
(1-41),(2-26)
3800000300004660001
(45-999),(36-998)
3800000300004660002
(27-999),(40-998)
3800000300004690001
(3-23),(2-36)
3800000300004690002
(1-13),2,2
3800000300004700001
(15-87),87,(4-66)
3800000300004700002
(1-21),(2-8)
3800000300004740001
(23-27),(10-20)
3800000300004740002
(1-103),(2-92)
3800000300004750001
(105-149),(94-134)
3800000300004750002
3800000300004760001
(29-999),(26-998)
3800000300004760002
(5-83),(4-130)
3800000300004770001
(85-999),(132-998)
3800000300004770002
(1-15),(4-102)
3800000300004860001
(17-63),(104-154),154
3800000300004860002
(1-137),(2-122)
3800000300004900001
(139-289),(124-214)
3800000300004900002
(291-999),(216-998)
3800000300004900003
3800000300004970001
(35-999),(42-998)
3800000300004970002
(1-101),(2-82)
3800000300005090001
(103-257),(84-218)
3800000300005090002
3800000300005130001
(31-97),(38-84)
3800000300005130002
(1-21),(2-36)
3800000300005220001
(23-999),(38-998)
3800000300005220002
11,(13-23),(20-32)
3800000300005240001
3800000300005240002
3800000300005300001
(17-53),(60-134)
3800000300005300002
(3-15),(2-58)
3800000300005300003
3800000300005300004
3800000300005300005
(1-9),(2-34)
3800000300005310001
(13-21),(36-46)
3800000300005310002
(23-49),(54-96)
3800000300005310003
(51-999),(98-998)
3800000300005310004
(1-33),(2-46),52
3800000300005320001
3800000300005320002
(37-49),50,(54-56),52
3800000300005320003
(53-113),(58-100)
3800000300005320004
3800000300005330001
3800000300005330002
(67-93),(54-88)
3800000300005330003
3800000300005440001
(5-15),(2-20)
3800000300005440002
27,29,49,(16-60)
3800000300005710001
3800000300005710002
7,(15-999),(16-998)
3800000300005720001
(1-5),(9-13),(2-14)
3800000300005720002
(1-121),(2-138)
3800000300005820001
(123-223),223,(140-190)
3800000300005820002
3800000300005830001
3800000300005830002
3800000300005830003
3800000300005840001
(31-55),(24-54)
3800000300005840002
(59-65),(56-60)
3800000300005840003
1,(9-999),(20-998)
3800000300005930001
(3-7),(2-18)
3800000300005930002
3800000300005960001
(109-999),(80-998)
3800000300005960002
(13-55),(12-32)
3800000300005960003
(57-105),(38-78)
3800000300005960004
108
3800000300005990001
108,108,108
3800000300005990002
(1-69),(2-66)
3800000300005990003
(73-999),(90-106),(110-998)
3800000300005990004
3800000300006100001
664033
3800000300006100002
664082
(39-51),(44-52)
3800000300006180001
(7-37),(2-42)
3800000300006180002
(1-33),(2-76)
3800000300006260001
(35-999),(78-998)
3800000300006260002
(1-53),(2-32)
3800000300006300001
(55-999),(34-998)
3800000300006300002
(1-65),(2-32)
3800000300006490001
(67-999),(34-998)
3800000300006490002
5,(24-998)
3800000300006540001
(1-3),(2-20)
3800000300006540002
3800000300006580001
(33-999),(16-998)
3800000300006580002
(1-71),(2-58)
3800000300006750001
(73-107),(60-104)
3800000300006750002
1,(8-76)
3800000300006900001
(3-999),(78-998)
3800000300006900002
(1-123),(2-132)
3800000300006970001
(207-223),(134-228)
3800000300006970002
3800000300006990001
(15-23),(10-64)
3800000300006990002
3800000400001160001
665840
3801
25405000000
3800000400001160002
665830
(17-25),27/31,(29-35),37 ,37/38
3800000400001160003
665813
(2-36),(39-43),49/42 ,45 
3800000400001160004
665825
(1-15),(2-18),23
3800000400001180001
665806
28-42
3800000400001180002
3800000400001260002
3800000400001260003
36,46,50,(45-53)
3800000400001260004
665808
3800000400001320001
665809
(9-13)
3800000400001320002
665810
3800000400001320003
3800000400001330001
665826
3800000400001330002
665827
3800000400001400001
(37-55),(38-62)
3800000400001400002
(67-69)
3800000400001400003
(64-82)
3800000400001400004
665821
3800000400001410001
3800000400001410002
3800000400001460001
665824
3800000400001460002
665811
3800000400001530001
665835
39
3800000400001530002
665838
7,7
3800000400001530003
(1-5),9
3800000400001530004
(2-6),6
3800000400001530005
665816
3800000400001590001
(17-55),(2-26)
3800000400001590002
(57-77)
3800000400001590003
3800000400001620001
(15-45),(16-50)
3800000400001620002
(47-53),(52-60)
3800000400001620003
33,35,(62-90)
3800000400001650001
(1-31),(2-60)
3800000400001650002
3800000400001710001
37,38
3800000400001710002
3800000400001790001
(17-27),(16-26)
3800000400001790002
1,1,3,5,5,5
3800000400001820001
3800000400001820002
(27-119),125,1-24
3800000400001930001
3800000400001930002
665812
3800000400001930003
665820
(26-40),42,42
3800000400001930004
15,15,(14-24),37,37,43
3800000400002060001
4,4,4,17,10,13,19,11
3800000400002060002
8,8,12,12
3800000400002060003
(1-9),(2-38)
3800000400002090001
(11-19),45
3800000400002090002
3800000400002090003
665819
55,77,9,20,22
3800000400002120001
(1-3),(2-18)
3800000400002120002
(11-23),24
3800000400002120003
3800000501300010001
665703
3805
25414366000
(91-261),(54-264),47
3800000501300010002
665714
(13-65),(18-82)
3800000501300050001
(67-353),(84-204)
3800000501300050002
80-114
3800000501300140001
(55-79),(14-78)
3800000501300140002
4,6,(5-65),(22-26)
3800000501300230001
(67-225),(46-160)
3800000501300230002
2-57,79-166
3800000501300570001
58-78
3800000501300570002
3800000501800010001
665702
25414365000
94
3800000501800010002
665712
3800000501800050001
3800000501800050002
(1-31),(4-30)
3800000501800090001
(33-97),(32-96)
3800000501800090002
(13-85),(8-72)
3800000501800110001
3800000501800110002
(3-29),(4-26)
3800000501800220001
(33-153),(28-74)
3800000501800220002
1-18,20-24
3800000501800490001
19,32
3800000501800490002
25-55
3800000501800590001
5-23,25,27
3800000501800590002
1/2,11/1,7,9
3800000502300060001
665730
2-18
3800000502300060002
665709
3800000900001250001
665000
3815
25428000000
3802200000400300001
666661
3817
25242555000
52-73
3802200000400300002
666660
3800001200000050001
666682
25438000000
8,10,12
3800001200000050002
666686
3800001200000050003
666687
3800001200000140001
666679
(33-49)
3800001200000140002
666683
3800001200000150001
666684
3800001200000150002
3800001200000150003
666681
5,7,17
3800001200000190001
666685
(32-48),25,27,35
3800001200000190002
4-16,18,20,24,26,28,30
3800001200000190003
(54-78)
3800001200000190004
3800001200000190005
3800001200000240001
3800001200000240002
(31-41)
3800001200000240003
3800001200000240004
(59-67)
3800001200000240005
3800001200000350001
3800001200000350002
(26-56)
3800001200000350003
3800001200000360001
3800001200000360002
3800001200000360003
3800001200000360004
(42-58),(45-65)
3800001200000360005
(60-68)
3800001200000360006
3800001200000400001
666671
3800001200000400002
666673
1,11
3800001200000730001
3800001200000730002
3800001400000160001
665402
3820
25445000000
(15-69),(20-74)
3800001400000160002
665408
3800001400000520001
665412
(21-27),(20-32)
3800001400000520002
665413
23,25,(32-54)
3800001400000970001
665409
3800001400000970002
665401
(27-87),(20-24),38,(42-56),(62-92)
3800001400001090001
(89-117),(94-140)
3800001400001090002
665407
(105-147),(120-144),(150-158)
3800001400001370001
(19-25),(35-69),(28-116),83,(93-103)
3800001400001370002
8,9,11,12,16,18,(19-45),(22-38)
3800001400001440001
(40-74),47,49,(55-99)
3800001400001440002
1,3,5,(8-16),13,15,24
3800001400001480001
(35-103),(34-112)
3800001400001480002
665415
168,197-215,221,221,225
3800001400001780001
76-153
3800001400001780004
665403
22,29,32,(35-41),(36-64)
3800001400001930001
(1-11),(2-10),14
3800001400001930002
3800001400002060001
5,7,(8-70),11,(19-61)
3800001400002060002
155,162,169,173,(177-185)
3800001400002140001
3,4,10,12,20,(15-39),24,(32-62),47
3800001400002140002
53,(61-137),(74-84),(96-110),116
3800001400002140003
(118-128),(141-151),(134-154)
3800001400002140004
3800001400002670001
(1-55),(2-38)
3800001400002670002
3800001400002690001
(3-7),2,(6-26),(13-19),23,27,29,30
3800001400002690002
(1-31),(2-20)
3800001400002780001
(33-53),(22-46),59
3800001400002780002
(29-49),(32-36)
3800001400002860001
(3-27),(2-30)
3800001400002860002
27,29,(10-14)
3800001400002890001
(1-7),2,23
3800001400002890002
(1-11),(15-35),(2-36)
3800001400003170001
(38-46),39,45,47,(50-78),(55-69)
3800001400003170002
10,19,(24-28),33,(45-51),(46-54)
3800001400003230001
55,(59-67),(56-66)
3800001400003230002
68,69
3800001400003230003
2,6,8,(13-17),17,42
3800001400003260001
3800001400003260002
3800001400003360001
(1-19),2,4,12
3800001400003360002
(59-85),(104-998)
3900000100000010001
236016
3906
27401368000
3900000100000010002
236006
3900000100000020001
(5-7),(24-998)
3900000100000020002
(89-175),(70-152)
3900000100000090001
236008
(154-998),(177-999)
3900000100000090002
236009
(1-87),(2-68)
3900000100000090003
14 ,14¡
3900000100000090004
236038
(56-998),(49-999)
3900000100000100001
236028
3905
3908
27401365000
(2-54),(1-47)
3900000100000100002
236039
(1-7),(14-22)
3900000100000320001
236022
3904
27401385000
(9-999),34,22/24
3900000100000320002
236023
3900000100000620001
3907
27401373000
(99-999),(114-998)
3900000100000620002
(57-999),(50-998)
3900000100000720001
(1-55),(2-48)
3900000100000720002
236010
27401380000
(1-65),(2-94)
3900000100000730001
236011
(67-999),(96-998)
3900000100000730002
(1-55),2,4
3900000100001810001
(57-999),(6-998)
3900000100001810002
236029
(22-30),(53-59)
3900000100001860001
10,15
3900000100001860002
(1-29),(2-28)
3900000100001880001
(31-999),(30-998)
3900000100001880002
3900000100002130001
(19-999),(2-998)
3900000100002130002
3900000100002220001
,(17-999)
3900000100002220002
3900000100002340001
(1-999),(2-4),(8-998)
3900000100002340002
236001
3900000100003120001
(27-999),(32-998)
3900000100003120002
(1-57),(2-40)
3900000100003470001
(59-143),(54-140)
3900000100003470002
(145-999),(158-998)
3900000100003470003
3900000100003500001
(69-999),(2-998)
3900000100003500002
236005
(2-14),74,(17-999)
3900000100003570001
(1-15),(16-72),(76-998)
3900000100003570002
(60-92),(61-999)
3900000100004110001
3900000100004110002
(15-17),(2-998)
3900000100004420001
(1-13),(19-999)
3900000100004420002
(1-81),(2-32)
3900000100004440001
3900000100004440002
(83-153)
3900000100004440003
(60-998),(65-999)
3900000100004610001
(1-63),(2-58)
3900000100004610002
3900000100005080001
56-999
3900000100005080002
3900000100005230001
(2-132),178,180
3900000100005230002
(164-172),(181-187),205,206,238
3900000100005440001
255,258,(262-998)
3900000100005440002
(1-165),(2-162),(173-179)
3900000100005440003
(182-208),185,(189-999)
3900000100005440004
(1-49),(2-58)
3900000100005610001
(51-999),(60-998)
3900000100005610002
114,(111-999)
3900000100006790001
(1-87),(52-998)
3900000100006790002
236040
3900000100006810001
(41-999),(32-998)
3900000100006810002
3900000100007660001
(49-999),(74-80),(84-998)
3900000100007660002
66,68,82
3900000100007660003
236036
3900000100008030001
(15-999),(14-998)
3900000100008030002
3900000100008220001
3900000100008220002
3900000100008550001
3900000100008550002
3900000100008770001
(8-998),(5-999)
3900000100008770002
4000000100004630001
248030
4028
29401000000
130,132-999
4000000100004630002
4029
1-12,22-34
4000000100004690001
248021
4000000100004690002
1-21,23
4000000100004810001
22,24-37
4000000100004810002
248027
4027
1-15,(16-998)
4000000100004820001
(17-999)
4000000100004820002
4000000100004980001
4000000100004980002
1-20,(21-67)
4000000100005060001
248016
69,71,73-999
4000000100005060002
(22-72)
4000000100005060003
4000000100005130001
4000000100005130002
1-6,(8-30)
4000000100005170001
248023
(7-29),31-999
4000000100005170002
1-34,(36-48)
4000000100005220001
248001
(297-999)
4000000100005220002
(35-51),(50-70)
4000000100005220003
1-59,64
4000000100005310001
74,76,66,78-999
4000000100005310002
4000000100005370001
33,35,37-999
4000000100005370002
1-111,(113-131)
4000000100005450001
(112-130),132-999
4000000100005450002
4000000100005510001
4000000100005510002
248000
1-42,(44-998)
4000000100005660001
248018
(43-999)
4000000100005660002
4000000100005700001
(141-999)
4000000100005700002
4000000100005700003
1-5,7,9,11
4000000100005740001
6,8,10,12-999
4000000100005740002
1-12,14
4000000100005810001
13,15-999
4000000100005810002
4000000100005840001
5,7,9-999
4000000100005840002
1-17,(19-23),25-999
4100000100000100001
683024
4101
30401000000
4100000100000100002
70-999
4100000100000320001
683016
4100000100000320002
683003
(2-46),(9-999)
4100000100000510001
(48-999)
4100000100000510002
1-9,10-999
4100000100000570001
683031
4100000100000570002
4100000100000800001
4100000100000800002
1,2,4,6,8-999
4100000100000880001
4100000100000880002
4100000100000960001
39,41,45,48
4100000100000960002
7,(12-20)
4100000100001450001
683902
(2-10),(22-999),(1-5),(9-999)
4100000100001450002
683023
(2-38),(5-25)
4100000100001530001
(40-999),(27-999)
4100000100001530002
4100000100001580001
683000
5-999
4100000100001580002
683004
4100000100001950001
683015
(36-999),(41-999)
4100000100001950002
683030
4100000100001970001
683049
4100000100001970002
(2-999),(1-5),(9-999)
4100000100002010001
683013
4100000100002010002
1,(2-68),(9-33)
4100000100002070001
(70-999),(35-999)
4100000100002070002
4100000100002210001
39-999
4100000100002210002
683032
1-85,85
4100000100002350001
87-999
4100000100002350002
1-27,29-32,34-999
4100000100002680001
28,33
4100000100002680002
1-71,80,80,92
4100000100002700001
683010
(72-999),(73-999)
4100000100002700002
4100000100002800001
4100000100002800002
4100000100003070001
4100000100003070002
1-11,(31-39)
4100000100003150001
12,17,19,(23-29)
4100000100003150002
1-103,105-999
4100000100003220001
683901
104
4100000100003220002
1,2,2,2
4100000100004020001
(42-64)
4100000100004020002
(42-999),(47-999)
4100000100004150001
(6-38),(3-39)
4100000100004150002
4100000100004170001
52,53,55,55,55,58
4100000100004170002
4100000100004300001
4100000100004300002
4100000100004500001
4100000100004500002
4100000100004610001
46-999
4100000100004610002
1-25,27-999
4100000100004860001
4100000100004860002
(1-25),(2-14)
4100000200000100001
684093
4141
4102
30535000000
(27-999),(16-999)
4100000200000100002
684092
9,27
4100500100000020001
684004
4105
30402000000
1-8,10-26
4100500100000020002
684000
(58-154),(71-155)
4100500100000450001
684007
4100500100000750001
40-42,44-47,(49-67)
4100500100000750002
(33-59),(50-282)
4100500100000790001
684005
(1-27),(2-48)
4100500100000790002
4100500100001510001
4100500100001510002
(2-18),(1-27)
4200000200000930001
652470
4246
32404000000
(20-42),(29-43)
4200000200000930002
652484
(50-152),(21-99)
4200000200001100001
(154-178),(101-133)
4200000200001100002
(1-46),(1-17)
4200000200001150001
(48-56),(25-39)
4200000200001150002
652471
(46-62),(67-77)
4200000200001340001
652486
(4-44),(1-65)
4200000200001340002
(58-60),(45-67)
4200000200001350001
652477
(2-56),(1-43)
4200000200001350002
1,(8-10),50,52,(56-60)
4200000200001440001
2,6,54,(3-39)
4200000200001440002
4200000200001490001
(32-88),(31-89)
4200000200001490002
(38-90),(41-97)
4200000200001510001
652480
(2-36),(1-39)
4200000200001510002
652472
(2-24),(1-11)
4200000200001980001
(62-72),(13-71)
4200000200001980002
652476
(70-108),(49-81)
4200000200002040001
4200000200002040002
(2-32),(1-23)
4200000200002290001
(34-52),(25-51)
4200000200002290002
(30-48),(23-50)
4200000200002540001
652474
4200000200002540002
(12-34),(11-37)
4200000200002560001
(2-10),(3-9)
4200000200002560002
(2-86),(1-67)
4200000200002760001
69,(79-89),(94-128),(95-127),136
4200000200002760002
(2-10),(1-9)
4200000200002810001
(12-16),(11-15)
4200000200002810002
(109-125),(116-124)
4200000200002840001
(1-114),(1-107)
4200000200002840002
(2-66),(1-75)
4200000200002990001
(68-90),(77-95)
4200000200002990002
(6-34),(9-29)
4200000200003050001
652488
(2-4),(1-7)
4200000200003050002
(2-32),(1-63)
4200000200003180001
(34-80),(65-119)
4200000200003180002
(2-36),(1-57)
4200000200003200001
(38-102),(59-103)
4200000200003200002
(2-86),(1-55),(73-87)
4200000200003620001
(93-107),94
4200000200003620002
(42-84),(31-67)
4200000200003630001
(2-40),(1-29)
4200000200003630002
4200000200003750001
(66-76),(53-69)
4200000200003750002
(2-16),(1-11)
4200000200003760001
(18-38),(17-37)
4200000200003760002
(2-72),(1-55),63
4200000200003810001
(74-114),(57-61),(65-113)
4200000200003810002
4200000200003840001
(154-226),(177-227)
4200000200003840002
(78-86),(73-79)
4200000200003990001
(102-122)
4200000200003990002
(32-70),(41-79)
4200000200004320001
4200000200004320002
(2-22),(1-21),30
4200000200004390001
(27-73)
4200000200004390002
(40-136),(39-135)
4200000200004470001
(138-198),(139-197)
4200000200004470002
4200000200004580001
(30-76),(33-75)
4200000200004580002
(20-46),(13-33)
4200000200004750001
4200000200004750002
(2-76),(11-85)
4200000200004870001
(78-154),(87-233)
4200000200004870002
4200000200004910001
(20-30),(36-42),(37-41)
4200000200004910002
2,6,10,(12-18)
4200000200004910003
(26-90),(15-83)
4200000200004930001
(2-8),(1-13)
4200000200004930002
(12-140),(13-139)
4200000200005180001
(142-220),(141-221)
4200000200005180002
652479
(4-10),(7-11)
4200000200005180003
(2-14),(1-17)
4200000200005210001
(16-36),(19-43)
4200000200005210002
4200000400000080001
652741
4222
32415000000
(29-61)
4200000400000080002
652740
4200000400000080003
(20-60)
4200000400000080004
4200000400000090001
(2-106)
4200000400000090002
(107-125)
4200000400000090003
(108-124)
4200000400000090004
4200000400000120001
4200000400000120002
(31-157)
4200000400000120003
(42-144)
4200000400000120004
4200000400000160001
4200000400000160002
(33-53)
4200000400000160003
4200000400000220001
4200000400000220002
(33-99)
4200000400000220003
(26-84)
4200000400000220004
4200000500000070001
652705
4211
32416000000
34,36-999
4200000500000070002
652718
4200000500000790001
652715
4200000500000790002
652723
4200000500001500001
652704
22-38
4200000500001500002
652716
1-59
4200000500002170001
60-999
4200000500002170002
4200000500002460001
65-999
4200000500002460002
(2-40),(1-57)
4200000500003220001
(42-998),(59-999)
4200000500003220002
(2-18),5
4200000500003390001
652700
15,20,21,22,26
4200000500003390002
652708
(2-48),(61-999)
4200000500004340001
63,(50-998)
4200000500004340002
(2-38),(1-11)
4200000500005020001
(40-152),(13-119)
4200000500005020002
4200000500005520001
21-999
4200000500005520002
(1-31),(2-16)
4200000500005840001
(18-998),(33-999)
4200000500005840002
4200000500005880001
652702
17-25
4200000500005880002
652707
6,6/2,6/3,6/4
4200000500006210001
4200000500006210002
4200000500006660001
4200000500006660002
17,(21-999),(42-998)
4200000500007410001
(1-15),19,(2-40)
4200000500007410002
1-98
4200000500007720001
99-999
4200000500007720002
4200000700000150001
652811
32434000000
4200000700000150002
4200000700000150003
652815
22
4200000700000150004
4200000700000160001
652800
4200000700000160002
(8-24)
4200000700000160003
4200000700000910001
652804
4200000700000910002
652807
4200000700000910003
4200000700001360001
(33-169)
4200000700001360002
4200000700001360003
652805
4200000700001360004
(171-249)
4200000700001360006
(132-180)
4200000700001360007
(9-37)
4200000700002080001
4200000700002080002
(39-41)
4200000700002080003
(50-54)
4200000700002080004
4200000700002250001
9-25
4200000700002250002
27-37
4200000700002250003
4200000700002510001
10-26
4200000700002510002
(19-999),17
4200000900000020001
650033
4205
32401000000
(2-998),(1-17)
4200000900000020002
650001
4200000900000050001
650036
4200000900000170001
4200000900000170002
(18-998),(15-999)
4200000900000380001
650002
(2-62),(1-59)
4200000900000440001
650052
(64-999),(61-999)
4200000900000440002
650016
(2-74),(1-103)
4200000900000520001
(80-999),(107-999)
4200000900000520002
(2-30),(1-7)
4200000900000640001
650032
(2-60),(1-45)
4200000900000790001
(62-998),(47-999)
4200000900000790002
(1-11),(2-6)
4200000900001390001
(13-999),(8-998)
4200000900001390002
(19-29)
4200000900001400001
650025
(2-22),(1-13)
4200000900001400002
650000
(2-42),(1-21)
4200000900001490001
(44-999),(23-999)
4200000900001490002
(152-998),(115-999)
4200000900001560001
650021
(60-150),(39-113)
4200000900001560002
650010
(16-998),(15-999)
4200000900001580001
650070
(4-10),(3-9)
4200000900001580002
(2-62),(1-63)
4200000900002140001
650044
(64-999),(65-999)
4200000900002140002
(2-60),(1-55)
4200000900002160001
(62-999),(57-999)
4200000900002160002
(32-998),(1-999)
4200000900002380001
4200000900002380002
4,4
4200000900002660001
650055
(6-999),(1-999)
4200000900002660002
650024
(21-31),15
4200000900004090001
(32-998),(33-999)
4200000900004090002
4200000900004170001
650023
(19-999)
4200000900004170002
650065
4200000900004360001
4200000900004360002
4200000900004390001
(23-999)
4200000900004390002
(212-999),(225-999)
4200000900004400001
650014
(30-66),(1-99)
4200000900004400002
(72-208),(101-219)
4200000900004400003
3,85
4200000900004610001
(4-28),(64-82),(57-63)
4200000900004610002
(14-998),(13-999)
4200000900004910001
650004
4200000900004910002
650066
(2-60),(1-59)
4200000900005090001
(62-999),(61-999)
4200000900005090002
(146-999),(137-999)
4200000900005200001
(44-144),(41-135)
4200000900005200002
(2-42),(1-39)
4200000900005200003
(110-999),(99-999)
4200000900005310001
(40-108),(33-97)
4200000900005310002
(22-998),(23-999)
4200000900005470001
(6-14),(1-21)
4200000900005470002
(2-58),(1-59)
4200000900005590001
(60-999),(61-999)
4200000900005590002
(16-40)
4200000900005960002
(2-14),(42-998),(1-999)
4200000900005960003
4200000900006130001
4200000900006130002
650056
4200000900006130004
4200000900006130005
650003
1,2,1,2
4200000900006910001
650031
(4-999),(3-999)
4200000900006910002
(2-16),(1-15)
4200000900007120001
4200000900007120002
(2-20),(1-25)
4200000900007540001
22,24
4200000900007540002
(2-4),(1-5)
4200000900007720001
(24-36),(25-45)
4200000900007720002
(90-998),(53-999),82
4200000900007950001
(6-80),(84-88),(7-51)
4200000900007950002
(1-17),(4-20)
4200000900007960001
4200000900007960002
4200000900008030001
(112-999)
4200000900008030002
(111-999)
4200000900008030003
(1-109)
4200000900008030004
(78-999),(75-999)
4200000900008100002
650068
(2-14),(1-25),27 ,16 ,16¡
4200000900008100003
(22-998),(13-999)
4200000900008140001
4200000900008140002
(2-86),(1-91)
4200000900008210001
(88-998),(93-999)
4200000900008210002
4200000900008240001
4200000900008240002
(91-99)
4200000900008270001
(50-64),(41-69)
4200000900008270003
(50-108),(37-79)
4200000900008330002
(110-154),(81-121)
4200000900008330004
(158-998),(123-999)
4200000900008330005
650051
4200000900008330007
(2-24),(1-21)
4200000900008360001
(23-35)
4200000900008360002
(26-54),(37-57)
4200000900008360003
(56-90),(59-81)
4200000900008360004
(92-98),(83-107),90
4200000900008360005
(109-135)
4200000900008360006
(100-136)
4200000900008360007
4200000900008360008
650060
(138-998)
4200000900008360009
(2-28),(1-17)
4200000900008420001
(30-998),(35-999)
4200000900008420002
(15-999),(20-998)
4200000900008460001
4200000900008460002
(4-28),(1-55)
4200000900008530001
(30-60),(59-77)
4200000900008530002
(62-998),(79-999)
4200000900008530003
(16-66),(1-63)
4200000900008640001
(4-14)
4200000900008640002
(68-276),(65-221)
4200000900008640003
(278-328)
4200000900008640004
(330-999)
4200000900008640005
(223-273)
4200000900008640007
4200000900008720001
(24-98),(19-99)
4200000900008720004
4200000900008760001
4200000900008760002
4200000900008760003
4200000900008760004
1,10,10,10
4200000900008840001
4200000900008840002
4200700100000110001
652150
4213
32422000000
(33-105),(40-106)
4200700100000110002
652155
(1-99),(2-90)
4200700100000130001
652152
(101-111),(92-126)
4200700100000130002
652156
(1-39),(2-38)
4200700100000200001
40-51
4200700100000200002
(1-7),(2-18)
4200700100000570001
652154
(9-107),(20-120)
4200700100000570002
(51-103),(88-158)
4200700100000850001
652153
(5-15),(4-26)
4200700100000850002
4200700100000970001
32,50,42
4200700100000970002
4200700100001050001
13-24
4200700100001050002
4200700100001070001
(60-78),(65-77)
4200700100001070002
4200700100001140001
(13-71),(12-78)
4200700100001140002
4200700100001240001
52,53,63
4200700100001240002
(85-183),(78-182)
4200700100001250001
4200700100001250002
4200700100001270001
(17-71),(26-78)
4200700100001270002
(61-143),(60-144)
4200700100001380001
4200700100001380002
(10-58),(13-73)
4200700100001550001
4200700100001550002
15,23
4200700100001640001
2,24
4200700100001640002
(19-111),(8-100)
4200700100001800001
(1-17),(2-6)
4200700100001800002
(46-52),(39-45)
4200700100001900001
4200700100001900002
4200001200000050001
654031
4218
32431362000
4200001200000050002
654038
4200001200000050003
654059
(7-53),(62-96)
4200001200000190001
654011
(55-999)
4200001200000190002
654067
2,4,13
4200001200000220001
654032
4221
32431364000
7-11,22-40
4200001200000220002
654034
2-7,(9-21)
4200001200000680001
654044
32431369000
(8-28),(29-33)
4200001200000680002
4200001200000890001
654029
4220
32431367000
4200001200000890002
654030
4200001200002130001
654002
32431370000
4200001200002130002
654086
3-8
4200001200003010001
4200001200003010002
654025
4200001200003120001
654013
(12-140)
4200001200003120002
4200001200003290001
4200001200003290002
654054
(23-39),96/39
4200001200003290003
1-10,12,14
4200001200004190001
654027
4217
32431373000
(11-17),(16-28)
4200001200004190002
654079
(21-53),(36-42)
4200001200004190003
654007
(50-64)
4200001200004190004
654018
(57-61),65-999
4200001200004190005
654080
102
4200001200004190006
654066
(1-29),(6-12)
4200001200004280001
(16-999),(31-999)
4200001200004280002
(59-87)
4200001200004660001
(3-57),(2-999)
4200001200004660002
4-6
4200001200005010001
4200001200005010002
654014
4200001200005950001
4200001200005950002
654041
4200001200005950003
(33-37)
4200001200005950004
39,41-56
4200001200005950005
654005
4200001200006020001
(6-14),(20-26)
4200001200006020002
4200001200006250001
4200001200006250002
4200001200006390001
79
4200001200006390002
654045
4200001200006440001
4200001200006440002
4,6,35,37
4200001200006500001
19
4200001200006500002
(5-31)
4200001200006530001
(6-32)
4200001200006530002
34-999
4200001200006530003
4,(1-31)
4200001200006620001
(2-30),32-999
4200001200006620002
4200001200006820001
4200001200006820002
1-30,32,34
4200001200006850001
31-54,29
4200001200006850002
4200001200007070001
15-99
4200001200007070002
4200001200007120001
10-140
4200001200007120002
4200001200007390001
(21-53),(26-52),54-57
4200001200007390002
4200001200007740001
100-172,4,6
4200001200007740002
12-36
4200001200008020001
12,17,19,38-80
4200001200008020002
4200001200008220001
4200001200008220002
4200001200008800001
4200001200008800002
4200001200008830001
32431000000
4200001200008830002
4200001200009200001
7-10
4200001200009200002
1-2,3,4-10,16,18
4200001200009660001
(15-25)
4200001200009660002
26-34,(42-99)
4200001200009660003
4200001200009660004
1-31,(33-59)
4200001200009730001
(32-58),60-999
4200001200009730002
1-100,102
4200001200010280001
101,103-999
4200001200010280002
4200001200010470001
4200001200010470002
1-25,27,29,31,33-42,(44-64),66-999
4200001200011320001
4200001200011320002
(26-32),(45-65)
4200001200011320003
4200001200011470001
(19-69)
4200001200011470002
(50-99)
4200001200011470003
4200001200011470004
8,10,12,(20-48)
4200001200011470005
4200001200011510001
(1-14)
4200001200011510002
(16-999)
4200001200011510003
(20-999)
4200001200011510004
8-63,(65-87),88-999
4200001200011540001
(64-86)
4200001200011540002
4200001200011540003
(58-68),64,64
4200001200011570001
4200001200011570002
(16-56),(3-47)
4200001200011570003
(49-99)
4200001200011570004
(8-20),(49-83)
4200001200011600001
(2-6),(22-48),(3-47)
4200001200011600002
87,89,93-999
4200001200011600003
(1-3),5-48,(49-57)
4200001200011630001
4200001200011630002
(50-58),59-999
4200001200011630003
4200001300002670001
653033
4223
32437000000
4-99
4200001300002670002
653047
4200001300004060002
4200001300004530001
21-99
4200001300004530002
653045
4200001300004540001
11-99
4200001300004540002
4200001300006510001
653002
18-50
4200001300006510002
653017
1-140
4200001300008220001
653003
151-186
4200001300008220002
653026
4200001300009030001
62-96
4200001300009030002
4200001300009520001
43-112
4200001300009520002
4200001300011320001
653013
52-131
4200001300011320002
653036
(39-47)
4200001300011350001
653039
4200001300011350002
653024
4200001300011350003
1-129
4200001300011420001
653009
130-211
4200001300011420002
653021
212-999
4200001300011420003
53-999
4200001300011430001
653052
4200001300011430002
8-52
4200001300011430003
653050
4200001300011520001
8-11
4200001300011520002
(1-9),(2-30)
4200001300011580001
4200001300011580002
653008
4200001300011640001
10-47
4200001300011640002
4200001300011640003
4200001300011740001
(13-79)
4200001300011740002
4200001300011740003
(40-56)
4200001300011740004
(1-55),(2-52)
4200001300011820001
57-77
4200001300011820002
4200001300011850001
653007
108-999
4200001300011850002
653046
10-109
4200001300011880001
4200001300011880002
4200001300011910001
27-51,58-77
4200001300011910002
653000
4200001300012010001
4200001300012010002
4200001300012010003
1-6,9-22
4200001300012060002
4200001300012060003
4200001400000010001
652050
4230
32449000000
(41-49)
4200001400000010002
652057
4200001400000020001
652055
27-103
4200001400000020002
4200001400000030001
16-49
4200001400000030002
51,53
4200001400000030003
652062
(28-38),(49-71)
4200001400000040001
4200001400000040002
4200001400000040003
4200001400000060001
4200001400000060002
41,43,45
4200001400000070001
4200001400000070002
4200001400000070003
4200001400000070004
652061
(28-44),(47-53)
4200001400000070005
4200001400000080001
4200001400000080002
(27-123)
4200001400000100001
(46-86)
4200001400000100002
4200001400000100003
4200001400000190001
5-18
4200001400000190002
4200001400000410001
44-69
4200001400000410002
652059
(31-43)
4200001400000410003
4200001400000470001
1,(5-9),(2-14)
4200001400000470002
(1-31),(2-36)
4300000100000060001
610002
4345
33401000000
(38-68),(33-79)
4300000100000060002
610027
4300000100000060003
610001
4300000100000170001
610042
(31-267),(38-284)
4300000100000170002
610047
4300000100000190001
610013
(7-45),(8-48)
4300000100000190002
610015
(1-45),(2-42)
4300000100000210001
(47-93),(44-92)
4300000100000210002
(1-65),(2-34)
4300000100000260001
610004
(67-91),(36-76)
4300000100000260002
610000
(93-227),(78-222)
4300000100000260003
(1-3),(2-6)
4300000100000270001
(5-27),(8-50)
4300000100000270002
(1-83),(2-82)
4300000100000500001
610020
(139-199),(126-168)
4300000100000500002
(201-251),(170-240)
4300000100000500003
(1-35),(2-24)
4300000100000520001
4300000100000520002
610033
(119-157),(82-140)
4300000100000520003
610021
(159-265)
4300000100000520004
610048
(41-71),(26-42)
4300000100000520006
(73-87),(44-52),54,54ª1,54ª2,54ª3
4300000100000520007
610017
(89-111),(56-80),54,54
4300000100000520008
610035
4300000100000670001
(81-123),(86-128)
4300000100000670003
610046
2
4300000100000700001
2,4-100
4300000100000700002
4300000100000710001
610005
(9-51),(8-58)
4300000100000710002
4300000100000750001
(49-87),(42-86)
4300000100000750002
(5-47),(6-40)
4300000100000750003
4300000100000750004
4300000100000920001
(59-91),(46-78)
4300000100000920003
(93-105),(80-214)
4300000100000920004
(1-61),(2-48)
4300000100001010001
(63-169),(50-162)
4300000100001010002
(11-135),(10-130)
4300000100001200001
4300000100001200002
4300000100001240001
(13-51),(10-58)
4300000100001240002
(16-60)
4300000100001360001
4300000100001360002
610006
4300000100001390001
(111-261),(120-282)
4300000100001390002
(39-61),(2-68)
4300000100001390003
4300000100001390005
610019
(89-109),(102-118)
4300000100001390006
(1-13),4
4300000100001400001
(15-47),(2-58),13,13
4300000100001400002
(49-95),(60-90)
4300000100001400003
(97-291),(92-288)
4300000100001400004
4300000100001480001
(31-99),(32-98)
4300000100001480002
1-80
4300000100001720001
1,1,1
4300000100001720002
10
4300000100001740001
610045
(1-59),(12-46),8
4300000100001740002
(61-173),(48-170)
4300000100001740003
(11-99),(18-90)
4300000100001940001
610014
4300000100001940002
(1-27),(2-34)
4300000100001970001
(29-49),(36-76)
4300000100001970002
(51-99)
4300000100001970003
(207-299),(262-300)
4300000100002250001
610008
4300000100002250002
(143-205),(134-260)
4300000100002250003
610007
(57-77),(70-82),(90-100)
4300000100002250004
(79-141),(84-88),(102-132),100
4300000100002250005
4300000100002270001
(15-29),(20-28)
4300000100002270002
(31-120)
4300000100002270003
610044
(30-100)
4300000100002270004
2-11
4300000100002400001
4300000100002400002
610050
1,(35-91),(12-82)
4300000100002400003
4300000100002410001
(47-99)
4300000100002410002
4300000100002410003
61,(63-99),(44-90)
4300000100002510002
(11-61),(12-42)
4300000100002510003
4300000100002690001
(17-77),(18-92)
4300000100002690002
(1-39),(2-54)
4300000100002750001
(41-199),(56-200)
4300000100002750002
80,71
4300000100002750003
(1-67),(2-68)
4300000100002780001
4300000100002780002
4300000100002840001
(49-99),(50-84),90,92
4300000100002840002
86,88,(94-150)
4300000100002840003
(1-15),(2-36)
4300000100002860001
(17-95),(38-98)
4300000100002860002
(97-153),(100-150)
4300000100002860003
(1-63),(2-60)
4300000100002920001
(101-147),(104-122)
4300000100002920002
(149-185),(124-250)
4300000100002920003
(187-255)
4300000100002920004
(65-99),(68-102)
4300000100002920005
(62-66)
4300000100002920006
4300000100003000001
15-21
4300000100003000002
4300000100003060001
(21-33),(22-36)
4300000100003060002
4300000100003220001
32
4300000100003220002
4300000100003230001
610011
(105-117),(52-62)
4300000100003230002
(119-145),(68-104)
4300000100003230003
(147-195),(106-194)
4300000100003230004
(41-85),(24-34)
4300000100003230006
(36-50),(87-103)
4300000100003230007
(64-66)
4300000100003230008
(1-13),(2-16)
4300000100003310001
(15-99),(18-90),9
4300000100003310002
62,62
4300000100003350001
(1-97),(2-94)
4300000100003350002
1-146
4300000100003420001
610030
147-398
4300000100003420002
610040
4300000100003680001
(31-197),(32-198)
4300000100003680002
4300000100003830001
(21-139),(24-136)
4300000100003830002
(9-19),(12-22)
4300000100003830003
4300000100003830004
4300000100003850001
4300000100003850002
(41-95),(38-90)
4300000100003850003
(1-29),(2-44)
4300000100003910001
(31-69),(46-70)
4300000100003910002
(71-177),(72-190)
4300000100003910003
4300000100004000001
(29-73),(36-76)
4300000100004000002
(75-195),(78-196)
4300000100004000003
23,25,47,(34-56)
4300000100004400001
4300000100004400002
(113-275),(98-272)
4300000100004400003
3-98
4300000100004450001
1,5
4300000100004450002
4300000100004500001
(11-81),(16-80)
4300000100004500002
4300000100004650001
(37-61),(30-88)
4300000100004650002
(63-179),(90-194)
4300000100004650003
(119-273),(94-156)
4300000100004660001
(158-274)
4300000100004660002
(2-76),(1-117)
4300000100004660003
4300000100004700001
100,(37-187)
4300000100004700002
610037
4300000100004700003
4300000100004820001
(7-91),(6-80)
4300000100004820002
(93-221),(82-204)
4300000100004820003
(1-13),(20-40)
4300000100004880001
(15-77),(42-94)
4300000100004880002
4300000100005110001
(19-71),(8-72)
4300000100005110002
(73-187),(74-190)
4300000100005110003
(12-14)
4300000100005200001
4300000100005200002
(1-45),(22-90)
4300000100005200003
4300000100005200004
11,(28-92)
4300000100005450001
4300000100005450002
(1-65),(2-30)
4300000100005610001
(67-89),(32-80)
4300000100005610002
4300000100005640001
610016
(29-99),(16-92)
4300000100005640002
4300000100005910001
(1-155),(2-178)
4300000100005910002
(1-85),(2-80)
4300000100005930001
(87-153),(82-152)
4300000100005930002
4300000100006030001
4300000100006030002
(1-85),(2-118)
4300800002500050001
612966
4307
33210820003
(87-315),(120-392)
4300800002500050002
612975
13/15,19/25,24/28,17,(1-7),(2-22)
4300800100000010001
612961
33404000000
27,34/40,(57-63),(50-62)
4300800100000010002
612960
9,14
4300800100000070001
(1-7),(2-12)
4300800100000070002
612965
4300800100000070003
612964
(35-105),(16-46)
4300800100000070004
612963
7,9,(14-28)
4300800100000110001
4300800100000110002
(11-17),(30-50)
4300800100000110003
2,2,2
4300800100000310001
4300800100000310002
(1-45),(30-68)
4300800100000310003
1,3-99
4300800100000380001
612962
4300800100000380002
612968
4300800100000440001
(9-23),(2-4)
4300800100000440002
11/13,15/27,29/45,14/48
4300800100000520001
(47-103),(50-94)
4300800100000520002
135,155/159,(139-153),(116-178)
4300800100000540001
(1-81),(2-114)
4300800100000540002
(161-333),(180-320)
4300800100000540003
38
4300800100000660001
4300800100000660002
(31-71),(44-64)
4300800100000660003
1/11,2/16,18/20,22
4300800100000770001
4300800100000770002
(1-43),(2-52),95,95,106,110,112
4300800100000790001
(45-93),(54-104),108
4300800100000790002
79,84
4300800100000800001
(1-49),(2-70)
4300800100000800002
(13-19),(2-16)
4300800100000900001
(21-49),(18-60)
4300800100000900002
(1-21),2
4300800100000920001
4300800100000920002
(31-55),(6-26)
4300800100000920003
9,11-47
4300800100000960001
4300800100000960002
4300800100001030001
4300800100001030002
(1-21),(10-32)
4300800100001050001
(23-41),(34-40)
4300800100001050002
4300800100001050003
(1-7),2
4300800100001110001
(9-25),(2-18)
4300800100001110002
3,17/25,27/31,33,72
4300800100001130001
4300800100001130003
46/80,(39-141),(82-148)
4300800100001260001
(1-37),(2-32)
4300800100001260002
(1-3),(2-12)
4300800200000350001
612993
33210504000
(5-67),(14-74),8
4300800200000350002
612990
4300800200000380001
(11-89),(18-114)
4300800200000380002
39,(48-52)
4300800200000390001
612994
(1-35),(14-46)
4300800200000390002
4300800200000560001
(17-87),(18-90)
4300800200000560002
4300800200000580001
(43-95),(50-114)
4300800200000580002
4300800200000610001
27,68
4300800200000610002
(1-25),(12-68)
4300800200000610003
(1-3),(2-8)
4300800200000650001
(5-63),(10-106),69
4300800200000650002
4300800200000680001
(37-125),(34-108)
4300800200000680002
1,3-18,2
4300800200000780001
4300800200000780002
4300800200000790001
(57-89),(56-88)
4300800200000790002
4300800200001010001
(19-39),(26-62)
4300800200001010002
(1-61),(2-70)
4301400100000970001
612607
4313
33410000000
(71-199),(72-200),65
4301400100000970002
612606
55,55,55,(56-200),(57-99)
4301400100001040001
4301400100001040002
612600
4301400100001080001
(2-28),29-999
4301400100001080002
(2-170),(1-157)
4301400100001240001
(159-299),(172-300)
4301400100001240002
(2-40),(1-15),(21-41)
4302200100000100001
613440
4321
33227501000
(42-56),(60-64),(47-55),(61-67)
4302200100000100002
613441
(37-59),28,30,38,(40-44),(48-52)
4302200100000200001
3,4,9,(8-24),(15-35)
4302200100000200002
(53-81),(42-66)
4302200100000370001
(6-10),(14-40),(3-15),(23-51)
4302200100000370002
(20-40),(43-55)
4302200100000400001
(2-18),(1-41)
4302200100000400002
(12-44),(13-17),27
4302200100000440001
(2-10),(3-11),(19-25),(29-39)
4302200100000440002
(26-36),40,42,25,27,31,33,39
4302200100000510001
(4-22),(3-23)
4302200100000510002
(1-3),(7-11),4,(8-24)
4302200100000530001
(13-49),(28-44)
4302200100000530002
(2-28),(5-27)
4303100100000110001
613154
4329
33413000000
1,3,(30-100),(29-99)
4303100100000110002
613150
(2-32),(36-64),(3-59)
4303100100000170001
1,34,61,63,65-999
4303100100000170002
(32-38),(47-55)
4303100100000200001
613151
1-31,33,35,37,39,41-46,(48-54),56-999
4303100100000200002
(27-35),39
4303100100000260001
1-26,(28-36),37,40-999
4303100100000260002
95,99,109,111,104
4303100100000300001
30-94,96-98,100-103,105-108,110,112-999
4303100100000300002
1-66,(67-75)
4303100100000450001
(68-76),77-999
4303100100000450002
(5-41)
4303100100000490001
1-4,(6-42),43-999
4303100100000490002
4303100100000610001
(18-100),(21-101)
4303100100000610002
(34-46),(39-57),50,54,56
4303100100000810001
1-33,35,37,48,52,58-999
4303100100000810002
10,11,13,18,19,21,(27-103),(26-36)
4303100100000820001
1-9,12,14-17,20,22-25,(38-104),105-999
4303100100000820002
4303600100000080001
613531
4334
33241501000
4303600100000080002
(31-143)
4303600100000080003
613530
(50-186)
4303600100000080004
4303600100000130001
4303600100000130002
(45-183)
4303600100000130003
(36-164)
4303600100000130004
4303600100000160001
4303600100000160002
(37-157)
4303600100000160003
(24-160)
4303600100000160004
4303600100000190001
4303600100000190002
(23-165)
4303600100000190003
(46-184)
4303600100000190004
4303600100000320001
4303600100000320002
(33-97)
4303600100000320003
(36-110)
4303600100000320004
4303600100000350001
4303600100000350002
(43-65)
4303600100000350003
(40-62)
4303600100000350004
4303600100000410001
4303600100000410002
4303600100000410003
4304000100000110001
612260
4339
33250501000
(25-999),(16-999)
4304000100000110002
612262
(2-24),(1-5)
4304000100000500001
612261
(26-66),(7-17)
4304000100000500002
612263
4304000100000520001
4304000100000520002
4304000100000900001
60-83
4304000100000900002
4400100100000070001
156013
4401
34401000000
(46-62),57
4400100100000070002
156007
4400100100000260001
156008
(31-75),(24-88)
4400100100000260002
(23-89),(12-46)
4400100100000580001
156005
(3-17),(2-10)
4400100100000580002
156000
1,1,1,(2-16)
4400100100000730001
(3-73),(20-52),(56-180)
4400100100000730002
156029
4400100100000920001
156001
(3-15),(4-12)
4400100100000920002
156022
4400100100000970001
(4-26),(3-29)
4400100100000970002
4400100100001130001
(20-44),(21-73)
4400100100001130002
4400100100001230001
156006
(1-13),(17-23),(2-20)
4400100100001230002
(15-41),(16-22)
4400100100001240001
156014
(2-14),(1-5),(28-32)
4400100100001240002
156019
(14-20),(13-19)
4400100100001260001
4400100100001260002
13/14,(2-22)
4400100100001290001
(1-33),(26-30)
4400100100001290002
(70-84)
4400100100001370001
156010
(2-60),(15-215)
4400100100001370002
1,3,5,7,2
4400100100001440001
156002
(9-59),(4-58)
4400100100001440002
156025
(3-61),(34-54)
4400100100001550001
(4-32)
4400100100001550002
(3-35),(4-24)
4400100100001560001
(37-41),(26-32)
4400100100001560002
4400100100001570001
156016
22,28,(51-61)
4400100100001570002
(15-81),(2-76)
4400100100001610001
4400100100001610002
(83-93)
4400100100001610003
26,28,45
4400100100001670001
(4-20),(3-21),(25-39)
4400100100001670002
4400100100001760001
156530
4400100100001760002
(2-62),(15-43),(66-70)
4400100100001760003
113-129,(29-111)
4400100100001860001
3/46,(2-14),3
4400100100001860002
(5-27),(16-32)
4400100100001860003
(34-112)
4400100100001860004
1,6
4400100100002000001
(8-40),(3-77)
4400100100002000002
156003
(1-65),(2-46)
4400100100002020001
(67-87),(48-74)
4400100100002020002
(1-45),(6-22)
4400100100002170001
(47-99),(24-74),2,4
4400100100002170002
(1-31),(2-14)
4400100100002360001
(105-163),(70-166)
4400100100002360002
(83-103)
4400100100002360003
(16-68),(35-79)
4400100100002360004
(1-21),(2-10)
4400100100002710001
(37-159),(12-134)
4400100100002710002
4400100100002900001
(51-79),(54-92)
4400100100002900002
(81-133),(94-112)
4400100100002900003
4400100100002980001
(19-53),(14-48)
4400100100002980002
(55-67),(50-68)
4400100100002980003
4400100100003040001
(9-69),(10-106)
4400100100003040002
(1-35),(2-38)
4400100100003060001
(52-142),(37-57)
4400100100003060002
4400100100003100001
(7-37),(6-30)
4400100100003100002
(1-9),(4-10)
4400100100003130001
(13-21),(16-28)
4400100100003130002
(3-19),(33-39)
4400100100003160001
(2-6),(12-20),32,1
4400100100003160002
(1-29),37,41,(2-36)
4400100100003430001
(38-52),(51-61)
4400100100003430002
(2-12),(20-26)
4400100100003560001
46,48
4400100100003560002
(1-9),(2-18)
4400100100003840001
(11-17),(22-38)
4400100100003840002
4400100100003900001
3-45
4400100100003900002
(19-23),(26-44)
4400100100003930001
4400100100003930002
(1-3),(2-4)
4400100100003960001
4400100100003960002
(15-49),(10-32)
4400100100003990001
(9-13),(4-8)
4400100100003990002
(21-55),(20-54)
4400100100004010001
4400100100004010002
(1-19),(4-24)
4400100100004030001
(35-47),(30-66)
4400100100004030002
(107-127)
4400100100004320001
(81-105),(78-116)
4400100100004320002
(2-76),(1-79)
4400100100004320003
4400100100004410001
(36-42),(23-27)
4400100100004410002
4400100100004420001
4400100100004420002
(5-49),(2-22)
4400100100004430001
(55-71)
4400100100004430002
(1-35),(4-42)
4400100100004500001
(37-105),(44-98)
4400100100004500002
(1-59),(2-40)
4400100100004580001
4400100100004580002
(61-107),(42-118)
4400100100004580003
(120-144)
4400100100004580004
156026
4400100100004600001
(3-27),(4-30)
4400100100004600002
36/50,56
4400100100004710001
(1-49),(2-34),(38-54),58
4400100100004710002
(1-37),(2-52)
4400100100004930001
(39-73),(68-94)
4400100100004930002
4400100100004980001
9-20
4400100100004980002
(1-87),(2-88)
4400100100005320001
(89-221),(146-154)
4400100100005320002
(124-140)
4400100100005320003
(90-122)
4400100100005320004
(3-31),(4-36)
4400100100005380001
(33-37),40,42
4400100100005380002
4-54
4400300100000020001
157006
4432
4402
34405000000
4400300100000020002
157004
1,3
4400300100000020003
157000
53,60
4400300100000090001
4-50
4400300100000090002
45-111
4400300100000600001
4400300100000600002
157008
57-128
4400300100000700001
3-7,25,27
4400300100000700002
4400300100000700003
(33-143),(64-142)
4400300100000820001
(1-31),(2-62)
4400300100000820002
144-300
4400300100000820003
4400300100000820004
2-47
4400300100000840001
48-115
4400300100000840002
4400300100000960001
4400300100000960002
(2-24),(1-31)
4400500100000240001
157200
4433
4403
34408000000
(26-62),(33-69)
4400500100000240002
157201
(16-66),(23-51)
4400500100000260001
(6-12),(3-19),4
4400500100000260002
4400500100000440001
(22-76),(17-65),78
4400500100000440002
4400500100000490001
(32-56),(41-67)
4400500100000490002
(2-28),(1-47)
4400500100000850001
(30-46),(49-67),69
4400500100000850002
(2-14),(1-7)
4401000100000010001
157300
4434
4404
34414000000
7 ,(9-29),(16-42)
4401000100000010002
157303
(1-47),(2-70)
4401000100000390001
49 ,(51-83),(72-120)
4401000100000390002
2-14,16-31
4401000100000450001
4401000100000450002
157305
4401000100000680001
(11-39),(8-22)
4401000100000680002
4401000100000750001
(1-29),(20-60)
4401000100000750002
157302
1 
4401000100000910001
157301
4401000100000910002
1-6,7,12,31,32,33
4401000100000990001
24,37,39
4401000100000990002
1,2,4,5
4401000100001140001
6-19
4401000100001140002
(3-55),(4-38)
4401000100001170001
38 ,(40-200),(63-191)
4401000100001170003
4401000100001180001
1 ,1¡,1¢,1£
4401000100001180002
4401000100001580001
4401000100001580002
18,47,49,51
4401000100001620001
4401000100001620002
1,3,5-999
4402400100000070001
157501
4436
4407
34430000000
4402400100000070002
157500
17,17
4402400100000210001
157505
(1-65),(2-40)
4402400100000270001
(42-999),(67-999)
4402400100000270002
(2-60),(1-67)
4402400100000310001
(62-999),(69-999)
4402400100000310002
4402400100000350001
(13-999),(14-999)
4402400100000350002
4402400100000620001
(15-999),(20-999)
4402400100000620002
157504
2,(6-12),(16-999),(1-5),(11-999)
4402400100000670001
4,7,9,14
4402400100000670002
(1-69),(2-80)
4402400100000700001
(127-999),(126-999)
4402400100000700002
(71-125),(82-124)
4402400100000700003
4402400100000740001
(35-999),(48-999)
4402400100000740002
4402400100001080001
4402400100001080002
4402400100001090001
4402400100001090002
4402400100001110001
(15-999),(14-999)
4402400100001110002
(1-55),(2-56)
4402400100001220001
(57-999),(58-999)
4402400100001220002
4402400100001280001
(45-999),(28-999)
4402400100001280002
4402400100001330001
(29-999),(28-999)
4402400100001330002
(1-83),(2-90)
4402400100001360001
(92-138),(85-137)
4402400100001360002
(43-53)
4402400100001390001
(1-13),(2-6),60,63
4402400100001650001
(8-58),(62-999),(15-61),(65-999)
4402400100001650002
(1-65),(2-50)
4402400100001740001
(67-999),(52-999)
4402400100001740002
4402400100001860001
(26-999),(23-999)
4402400100001860002
4430
34248000000
(12-999),(9-999)
4402400100001870001
(2-10),(1-7)
4402400100001870002
4402400100001900001
(8-999),(1-999)
4402400100001900002
4402400100001910001
(2-999),(1-21)
4402400100001910002
4402400100001930001
4402400100001930002
8,(12-999),(11-999)
4402400100001960001
(2-6),(1-9),10
4402400100001960002
(1-15),(2-16),37
4600000100000160001
305016
4632
38401365000
(135-177),(88-138)
4600000100000160002
305040
(81-133),(18-86)
4600000100000160003
305003
(12-84),(15-97)
4600000100000750001
(1-13),(2-4)
4600000100000750002
305001
(27-87),(46-80)
4600000100000790001
305023
(3-25),(2-44)
4600000100000790002
305035
(1-69),(2-68)
4600000100001040001
(70-196),(71-211)
4600000100001040002
4600000100001360001
(2-14),(1-15),(19-31)
4600000100001360002
4600000100001500001
(3-13),(4-34)
4600000100001500002
4600000100001800001
305007
38401373000
(11-39),(16-42)
4600000100001800002
305047
4600000100001820001
305000
(23-43),53,(22-68)
4600000100001820002
(47-51),(55-95),(70-90)
4600000100001820003
1-63,65
4600000100001830001
100,102,104
4600000100001830002
305029
(64-98),61,(67-119)
4600000100001830003
305004
(2-38),(3-51)
4600000100001910001
(53-91),(40-48)
4600000100001910002
(19-91),(28-92)
4600000100002010001
305022
38401369000
4600000100002010002
305010
(2-46),(1-43)
4600000100002510001
(48-96),(47-93)
4600000100002510002
4600000100002560001
305044
17-106
4600000100002560002
(41-77),25,27
4600000100003010001
(2-48),(1-23),(29-39)
4600000100003010002
(50-104)
4600000100003010003
4600000100003120002
,(2-16)
4600000100003120003
4600000100003270001
(57-73),(44-108)
4600000100003270002
(9-53),(8-42)
4600000100003270003
(97-111)
4600000100003550005
305045
1-95
4600000100003550006
305026
4600000100004250001
3,3
4600000100004250002
(77-79)
4600000100004250003
305014
82,101
4600000100004250004
(27-69)
4600000100004250005
(5-25),10
4600000100004250006
(71-75)
4600000100004250007
305021
(12-66)
4600000100004250008
4600000100004250009
(68-82)
4600000100004250010
(1-57),(2-66)
4600000100004260001
(68-106),(59-81)
4600000100004260002
4600000100004410001
(113-143)
4600000100004410002
(130-150)
4600000100004410003
4600000100004410004
45,45,(47-85),(60-104),106,106
4600000100005000001
(1-43),(4-58)
4600000100005000002
(1-47),(16-24)
4600000100005230001
(2-14),(26-32)
4600000100005230002
4600000100005250001
305048
4600000100005250002
(1-81),(2-56)
4600000100005390001
(153-167),(108-156)
4600000100005390002
(83-113),(58-92)
4600000100005390003
(52-58),69-77
4600000100005430001
(1-67),(2-50)
4600000100005430002
4600000100005620001
(19-81),(22-84)
4600000100005620002
4600000100005630001
(3-13),(2-32),34,34
4600000100005630002
4600000100005880001
4600000100005880002
1-210
4600000100006070001
(211-243),(212-250)
4600000100006070002
4600000100006250001
305008
101-120
4600000100006250002
1,5,11
4600000100006340001
2,3,4,6-10,12-39
4600000100006340002
4600000100006360001
44-119
4600000100006360002
31,31,(33-87),(48-110)
4600000100006440001
4600000100006440002
51-60
4600000100006470002
(1-63),(2-74),65,65,65
4600000100006690001
(67-93),(76-100)
4600000100006690002
(1-179),(2-170)
4600000100006800001
(181-211),(172-204)
4600000100006800002
(213-225)
4600000100006800003
(26-30),(41-73)
4600000100006950001
(2-24),(1-37)
4600000100006950002
(3-59),(4-64)
4600000100007380001
(61-75),(66-84)
4600000100007380002
4600000100007760001
(7-27),(6-48)
4600000100007760002
171-179
4600000100008670001
(58-84)
4600000100008670002
4600000100008670003
4600000100008730001
30-40
4600000100008730002
4600000100008760001
4600000100008760002
1-104
4602000100000010001
307370
4620
38234501000
4-78
4602000100000020001
1-120
4602000100000030001
307374
4602000100000040001
4602000100000050001
307373
4602000100000070001
1-184
4602000100000090001
4602600000100010001
307540
4626
38246551000
4602600000100020001
4602600000100030001
4602600000100040001
4602600000100050001
4602600000100060001
4602600000100070001
1-193
4602600000100080001
1-134
4602600000100090001
4602600000100100001
4602600000100110001
4602600000100120001
4602600000100130001
4602600000100140001
4602600000100150001
4602600000100160001
1-115
4602600000100170001
4602600000100180001
4602600000100190001
1-222
4602600000100210001
4602600000100220001
4602600000100230001
4602600000100240001
4602600000100250001
4602600000100260001
1-53
4602600000100270001
1-235
4602600000100280001
4602600000100290001
4602600000100300001
4602600000100310001
4602600000100320001
4602600000100330001
4602600005000010001
307573
38246820001
4602600005000020001
4602600005000030001
4602600005000040001
4602600005000050001
4602600005000060001
4602600005000070001
4602600005000080001
4602600005000090001
4602600005000100001
4602600005000110001
1-63
4602600005000120001
4602800100000040001
306531
4628
38415000000
4602800100000070001
4602800100000100001
4602800100000160001
(1-3),2
4602800100000220001
(1-63),(2-26)
4602800100000290001
4602800100000310001
(1-15),(2-28)
4602800100000390001
(1-17),(2-16)
4602800100000440001
4602800100000450001
4602800100000530001
4602800100000580001
(1-23),(20-26)
4602800100000640001
4602800100000650001
4602800100000730001
4602800100000780001
4602800100000790001
4602800100000810001
4602800100000850001
(1-31),(2-22)
4701600100000110001
188560
4713
41451000000
(33-49),(24-50)
4701600100000110002
188563
4701600100000150001
(4-20)
4701600100000150002
188565
17,19-53
4701600100000310001
(7-15),(12-18)
4701600100000310002
4701600100000410001
19-25,(26-34)
4701600100000410002
17,(27-33)
4701600100000670001
(3-7),6,13
4701600100000670002
3,4,5,7,9
4701600100001130001
4701600100001130002
60,60,62,62,70
4800000100001590001
398002
4825
42401370000
(35-61)
4800000100001590002
4826
42401375000
(1-23),27/1,27/2
4800000100002230001
398050
4800000100002230002
(7-33),(37-43),(14-40),3,5/1
4800000100002360001
(47-71),(42-66)
4800000100002360002
398020
(5-29)
4800000100003740001
398032
16,18,20
4800000100003740002
398055
4800000100003870001
398059
4824
42401368000
4800000100003870002
4800000100004260001
4800000100004260002
3,5,8,10
4800000100004270001
30-82
4800000100004270002
1,6,8
4800000100004290001
398001
3,5
4800000100004290002
398024
3-61
4800000100005960001
(62-90),(77-91)
4800000100005960002
4801800100000700001
399902
4813
4818
42256501000
4801800100000700002
399900
28/32,29,30
5000000400000140001
143981
5012
46424000000
5000000400000140002
143982
7/27,9/24,5
5000000400000390001
1-4,5,6,8,10,11,13
5000000400000390002
143985
20,22,23,25,86,88
5000000400000620001
1,2,3,4,5,9,11,13,14,16,18,19,21
5000000400000620002
143989
5,9,7,11,3
5000000400000680001
143980
1/2,12/18,4,6,10,14,16,18
5000000400000680002
143986
13,15,20,22,23,24,26-33,34,35-45,49-55
5000000400000680003
143987
25,27,29,(1-23)
5000000400000710001
68-97
5000000400000710002
7-28
5000000400000740001
5000000400000740002
1,2,4,6,8,10,12,14,16,18,20,22,24,32,50
5000000400000760001
3,5,7,9,11,15,17,19,21,23,25,27,29,31
5000000400000760002
2,4,5,(6-12),(25-35)
5000000400000970001
51,53,55,57,59,61,(14-42),71,78,81
5000000400000970002
11/1,1,3,5,8,31,33,35
5000000400001150001
2,4,6,7,9,10,12-21
5000000400001150002
5000000700000010001
141281
5038
5016
46432000000
26-99
5000000700000010002
141284
5000000700000030001
27-67
5000000700000030002
15,17,19/2
5000000700000080001
141282
2,3,5,10,11
5000000700000080002
141280
7,9,11
5000000700000130001
12,14,16,20,22,24,26
5000000700000140001
11,15,19,21
5000000700000140002
5000000700000200001
5000000700000200002
1,4,6,8,10,12,14,16,18,20,22,24,26,33
5000000700000250001
3-27,28-32,34,36,38,40,42,44,46,48,50,52
5000000700000250002
1-70,72,74
5000000700000420001
71,73,75,76-81
5000000700000420002
5000000700000650001
5000000700000650002
2-10,1/28,12/7
5000000700000670001
13-39,11/10
5000000700000670002
2-22
5000000900000210001
141070
5018
46434000000
24-50
5000000900000210002
141074
5000000900000280001
141080
39-75
5000000900000280002
141075
76-124
5000000900000280003
141073
(3-17),18-37
5000000900000300001
141071
(6-16)
5000000900000300002
4-10
5000000900000380001
5000000900000380002
5000000900000400001
15-29
5000000900000400002
1-8,14
5000000900000510001
12,15,17/4,29/1
5000000900000510002
141076
12-14
5000000900000630001
16-38
5000000900000630002
5000000900000680001
(7-11),(20-24)
5000000900000680002
141077
5000000900000680003
141078
26-144
5000000900000700001
5000000900000700002
1,6,8-14
5000000900000830001
3,5,7/14
5000000900000830002
(4-22)
5000000900001170001
(26-34)
5000000900001170002
4,(8-22)
5000000900001290001
3,6,5/1
5000000900001290002
(9-19)
5000000900001290003
5000001300000020001
140082
5027
5026
46441000000
7-14
5000001300000020002
140083
5000001300000050001
140081
5
5000001300000050002
140080
13
5000001300000060001
4,6,54-62
5000001300000070001
8-49
5000001300000070002
1/11,9,9,16
5000001300000080001
24-32
5000001300000080002
5000001300000080003
5000001300000090001
19-27
5000001300000090002
2-8,10,12,14
5000001300000110001
9,11,13,15-19,24-26,30
5000001300000110002
1-3,5,7-999
5000001300000120001
5000001300000120002
27/7,2-21,23,25
5000001300000130001
3/5
5000001300000130002
36/5,(22-36)
5000001300000130003
1,5,34
5000001300000140001
5000001300000140002
1-7,10
5000001300000150001
9,11,12
5000001300000150002
3/12,6/14,4,12
5000001300000170001
7,9,11,13-15
5000001300000170002
33/1,39/1,(2-6),12,13,19,21,24-26
5000001300000180001
5000001300000180002
29,36
5000001300000180003
1-32,34-36,38-999
5000001300000190001
33,37
5000001300000190002
1-14,16-18
5000001400000120001
142280
5043
5037
46467000000
15,19-40
5000001400000120002
142281
31 ,34-44
5000001900000040001
141191
5050
5052
46480000000
5000001900000120001
141195
1-16,18-29
5000001900000120002
141190
5000001900000140001
20,20,26,28
5000001900000140002
(1-17),(2-18),24,26
5000001900000170001
(19-47)
5000001900000170002
13,15,19
5000001900000220001
(1-7),2,4/1,4/2,6,8-16,18,24
5000001900000220002
17,(21-25),20,22,24/1,24/2,24/3
5000001900000220003
141196
1,1,2,2,3-6,12,20
5000001900000230001
1,2
5000001900000230002
2,3,4,5
5000001900000330001
5000001900000330002
15-30
5000001900000410001
1,5,(2-8)
5000001900000440001
1,2,3,(7-11)
5000001900000440002
5000002100000020001
144005
5053
46490000000
5000002100000020002
144000
(1-19),(6-24)
5000002100000090001
144002
32,40
5000002100000090002
5000002100000380001
(33-43),(52-60)
5000002100000380002
144012
(7-31),(22-50)
5000002100000380003
144003
(13-55),(2-42)
5000002100000390001
144001
(44-58)
5000002100000390002
144009
5000002100000400001
(6-18)
5000002100000400002
5000002100000410001
(2-12),(23-43)
5000002100000410002
(2-20),
5000002100000420001
(32-82)
5000002100000420002
40/8,(27-41),(22-38)
5000002100000430001
(43-47),(42-44)
5000002100000430002
(8-20),22,(13-23)
5000002100000430003
(2-6),(1-11)
5000002100000430004
144006
20
5000002100000500001
(1-7),(2-14)
5000002100000500002
(9-999),(16-999)
5000002100000500003
144007
5000002100000510001
144011
5000002100000510002
5000002100000590001
(17-35),(24-40)
5000002100000590002
5000002100000590003
5000002100000610001
144008
(4-18)
5000002100000610002
5000002100000680001
(7-29),(10-26),29
5000002100000680002
5000002100000690001
5000002100000690002
(1-29),(28-50)
5000002100000700001
5000002100000700002
5000002100000700003
5000002100000710001
(12-999)
5000002100000710002
5000002100000720001
5000002100000720002
5000002100000720003
144004
5000002100000820001
(11-999),(16-999)
5000002100000820002
,(28-34)
5000002100000840001
5000002100000840002
(36-44)
5000002100000840003
5000002100000850001
(23-37),(20-36)
5000002100000850002
5000002100000900001
(31-999),(12-54)
5000002100000900002
(7-29)
5000002100000900003
24,24,(26-34)
5000002100000930001
21,(2-24)
5000002100000930002
(23-25)
5000002100000930003
5000002100000930004
(76-130)
5000002100000960001
(27-39)
5000002100000960002
144010
(41-51),(48-74)
5000002100000960003
(44-46)
5000002100000960004
5000002100000980001
(27-49),(26-46)
5000002100000980002
(51-65),(48-62)
5000002100000980003
5000002300000020001
140090
5056
46411000000
27
5000002300000020002
140093
1-7,19,20,23,24
5000002300000070001
8-18
5000002300000070002
13-19
5000002300000080001
5000002300000080002
10,12,14,18,20
5000002300000150001
140091
26,28,30
5000002300000150002
5000200100100230001
143956
5001
46204501000
90-111
5000200100100230002
143930
16-18
5000200100100260001
5000200100100260002
5000200100400460001
20-25
5000200100400460002
5000200100400560001
13-23
5000200100400560002
5000200100400620001
(66-72)
5000200100400620002
(67-73)
5000200100400620003
74-90
5000200100400620004
5000200100400750001
31-52
5000200100400750002
1-22,(24-44),46-66
5000200100400800001
(23-45),70-94
5000200100400800002
15,(19-27)
5000200100400930001
1-14,(16-26),28-34
5000200100400930002
5000200100401120001
5000200100401120002
5000200100000070001
143910
14-23
5000200100000070002
143905
5000200100000140001
19-21
5000200100000140002
(42-66),35
5000200100000220001
143903
75-77
5000200100000220002
81-87
5000200100000220003
5000200100000220004
143904
5000200100000220005
143907
36-41
5000200100000220006
5000200100000220007
67-73
5000200100000220008
5000200100000220009
143912
5000200100000380001
5-19
5000200100000380002
2-6
5000200100000410001
8-22
5000200100000410002
5000200100000420001
9-18
5000200100000420002
13-63
5000200100000500001
5000200100000500002
17-65
5000200100000530001
143902
5000200100000530002
5000200100000530003
143909
2-4
5000200100000530004
(52-78)
5000200100000640001
143900
(55-77)
5000200100000640002
79-85
5000200100000640003
5000200100000640004
(31-37)
5000200100000640005
39-51
5000200100000640006
5000200100000640007
(32-38)
5000200100000640008
1,3,5,1 ,3 ,3¡,5 ,5¡,5¢
5000400100000380001
140207
5005
46206501000
6,8,10,18,20,30,12,14,16,26 ,26¡
5000400100000380002
140209
5000400100000400001
16,18,20,23,24,26,27,28
5000400100000400002
5,6,7,9,10,11,(12-18)
5000400100001020001
140205
(15-35),(20-30)
5000400100001020002
140200
5000400100001630001
9-17
5000400100001630002
(2-46),(1-79)
5000700100000050001
140301
5011
46212501000
(48-68),(81-117)
5000700100000050002
140300
(96-102),(143-151)
5000700100000330001
140304
(6-28),(11-43)
5000700100000330002
(55-117),(32-70)
5000700100000330003
(1-9),10
5000700100000540001
(11-61),(12-44)
5000700100000540002
5000700100000580001
(62-78),(67-93)
5000700100000580002
110,112,114,116
5000700100000720001
141/14,(68-108),(69-131)
5000700100000720002
5000700100000720003
(51-61),(66-82),84/49
5000700100000730001
(35-47),(48-62)
5000700100000730002
(2-60),(1-83)
5000700100000980001
(62-100),(85-121)
5000700100000980002
(2-90),(1-19)
5000700100001160001
(92-126),(21-37)
5000700100001160002
(30-42),(27-47)
5000700100001170001
(4-28),(3-25)
5000700100001170002
191,195,197/17
5000700100001310001
1-135
5000700100001310002
136-190,192,193
5000700100001310003
5000700100001340001
(44-80),(35-81),101,103
5000700100001340002
(2-40),(1-49)
5000700100001400001
(46-58),(61-81)
5000700100001400002
(4-28),(11-21)
5000700100001650001
(31-61),(81-87),(50-184)
5000700100001650002
1,1
5000700100001660001
(4-84),1/6,(13-73)
5000700100001660002
59-74
5001100100000010001
141613
5020
46221501000
5001100100000010002
141601
(1-23),25/58
5001100100000100001
141606
(4-36)
5001100100000100002
141612
5001100100000110001
141607
44-52
5001100100000110002
141604
2/13,3/2,4,6
5001100100000150001
51/2,59/71,(53-57)
5001100100000150002
24,(35-49)
5001100100000150003
28,30
5001100100000150004
5001100100000230001
5001100100000230002
5001100100000570001
14,16,20
5001100100000570002
141602
13,15,31,33,(46-54),44,44,88
5001100100000600001
1,21,53 ,55
5001100100000600002
141600
4,5,6/17
5001100100000640001
49/12,50/10,54/39,59/10,41,45,48,52,63
5001100100000640002
(8-20),(13-69),88
5001100100000720001
70-87,89-102
5001100100000720002
2-42
5001100100000760001
(44-56),60,58/25
5001100100000760002
11/23,15/1,17/2,21/33,3,13
5001100100001280001
1/2,3,5
5001100100001280002
3-16,18,20-45,47-49,51-57,65,67
5001100100001490001
17,19,46,50,(58-66),(59-63),68-83
5001100100001490002
(1-17),2,4
5000002700000030001
140405
5022
46438000000
5000002700000030002
140404
5000002700000090001
(23-43),(2-50)
5000002700000090002
5000002700000120001
140408
19-39
5000002700000120002
140402
(43-81),(34-78)
5000002700000290001
(9-35),(8-28)
5000002700000290002
140406
1-3,4-69
5000002700000610001
140411
2,4
5000002700000610002
140407
5000002700000970001
140415
33-116
5000002700000970002
5000002700001110001
6-53
5000002700001110002
5000002700001610001
140400
(9-17),(20-26)
5000002700001610002
1-220
5000002700002830001
221-251
5000002700002830002
(1-13),54
5000002700003260001
(15-21),(56-78)
5000002700003260002
44-98
5000002700003270001
(5-23),42
5000002700003270002
5000002700003270003
(20-42)
5000002700003270004
5000002700003280001
34-56
5000002700003280002
13,15,17,19-58
5000002700003290001
(1-11),(2-14),16,18
5000002700003290002
5000002700003300001
(7-53),(18-60)
5000002700003300002
5000002700003310001
5-120
5000002700003310002
5000002700003320001
5000002700003320002
5000002700003330001
(21-43),(20-50)
5000002700003330002
5000002700003340001
(23-43),21,(10-36)
5000002700003340002
10-32
5000002700003350001
34-98
5000002700003350002
5000002700003360001
16-45
5000002700003360002
5000002700003370001
53,53,55
5000002700003370002
(1-43),43,(10-44)
5000002700003370003
(57-139)
5000002700003370004
(46-80)
5000002700003370005
5000002700003380001
(1-13),(12-16),6
5000002700003380002
(15-27),(20-42)
5000002700003380003
368-429
5000002700003390001
431-441
5000002700003390002
(1-173),(2-168)
5000002700003390003
140412
(197-241),(170-242)
5000002700003390004
(243-291)
5000002700003390005
(293-367),381,(320-364)
5000002700003390006
(254-318)
5000002700003390007
5000002700003400001
(1-7),(2-40)
5000002700003400002
(21-41),(42-58)
5000002700003400003
(43-109),(60-114)
5000002700003400004
5000002700003410001
(13-39),(14-50)
5000002700003410002
15,17,(22-26)
5000002700003420001
(1-13),(2-20)
5000002700003420002
5000002700003430001
(19-37),(20-48)
5000002700003430002
5000002700003440001
140413
2-68
5000002700003440002
140414
5000002700003450001
(1-7),6,12,13
5000002700003450002
100,102,(11-33)
5000002700003470001
(2-98)
5000002700003470002
5000002700003480001
(29-39),(20-24)
5000002700003480002
25,35,37,38,38,38,38,38
5000002700003490001
5000002700003490002
(27-51),(40-56)
5000002700003490003
5000002700003500001
5000002700003500002
5001500000100070001
143800
5004
5071
46229551000
(54-82),(67-99)
5001500000100070002
143801
1-5,30
5001700100000260001
140005
46231501000
3,5,11-27
5001700100000290001
140014
1,6,7,9
5001700100000290002
140004
5001700100000360001
140009
5001700100000360002
140013
9,11,13,15,17
5001700100000620001
5,7,7
5001700100000620002
1-6,10,11
5001700100000730001
140007
5001700100000730002
5001700100000760001
,19
5001700100000760002
140006
(120-170)
5001700100000820001
(7-123),(14-116)
5001700100000820002
140002
(178-296),(125-295)
5001700100000820003
140000
(298-306),(325-375),403
5001700100000820004
(346-388),(405-409)
5001700100000820005
5001700100000840001
5001700100000840002
1-3,5-24,26,27
5001700100000940001
19/6,4,28,29,25
5001700100000940002
1-4,17-999
5001700100001000001
5-16
5001700100001000002
(102-246),(119-209)
5002300100000740001
140563
5033
46242501000
(2-100),(1-117)
5002300100000740002
140560
(51-55),(59-67),69,71,73,77
5000002600002700001
142608
5034
46457000000
26,(32-38),(41-49)
5000002600002710001
142603
2,4-9
5000002600002720001
3,10-17,(19-53)
5000002600002720002
142613
5000002600002730001
3,5,6,,7,9,11-15,(18-24)
5000002600002730002
142602
43,45,46-50,49,(52-56)
5000002600002780001
6-8,30,40,50,(60-68)
5000002600002790001
9,11,13-16,19,21,23-27,31,35,38,40
5000002600002810001
142605
4,6,7
5000002600002820001
(58-72),(76-88)
5000002600002830001
1,(5-19),23,25
5000002600002840001
40,40,42,44,64,66,68
5000002600002850001
5002400400000430001
142671
46243513000
34,36,37,39
5002400400000430002
142672
23/29,29,32
5000002400000350001
142105
5074
5036
46460000000
5000002400000350002
142118
41/12,1,9,(28-32),33
5000002400000710001
(34-46),52,1/47,2/43,(58-66),79
5000002400000710002
3,5-7,(9-15)
5000002400000940001
142117
(19-25),27/14
5000002400000940002
(3-9),(4-10)
5000002400000970001
142114
10,13
5000002400000970002
6,17,19
5000002400001060001
142110
1/42,2/40,3-15
5000002400001060002
1,2,5,37,38,40-44,52
5000002400001410001
(53-67),(54-68),(70-90),(71-89)
5000002400001410002
(1-12),13,14,15,(4-10)
5000002400001580001
142104
5000002400001580002
(1-11),19,21,25,27,31,33/21,(35-39)
5000002400001760001
(38-42),(46-54)
5000002400001760002
(41-63),(56-80)
5000002400001760003
5000002400001760004
142100
5000002400002050001
142119
27/2,(29-41)
5000002400002050002
142121
37/32,41/32,56/33
5000002400002200001
(59-75),(60-76),110,111,112,113/32
5000002400002200002
38/1,38/2,42/26,53,57/28,59/1,59/2
5000002400002230001
50,61
5000002400002230002
(2-114),(23-73)
5000002400002270001
142106
130/25,(89-101),(136-158)
5000002400002270002
109/61,113/62,111
5000002400002270003
5000002400002280001
7,(10-24)
5000002400002280002
1/7,5/6,(9-13),(2-6),(16-26)
5000002400002370001
2,3/48,8,10
5000002400002540001
142116
3,(25-29),33,(37-43),45/17,57,(67-71)
5000002400002540002
50/12,12,(28-36),46,44,(52-58)
5000002400002540003
23/19,26,27/10
5000002400002830001
2,4,6/18,(1-19)
5000002400002830002
10,12,14/20
5000002400002830003
5000002400002830004
(2-6),(11-25)
5000002400003070001
(1-9),2
5000002400003070002
5,(11-13),(37-43)
5000002400003270001
2,(16-26),(34-40),45,47,56,57
5000002400003270002
24,27
5000002400003320001
2,7,9,11
5000002400003320002
2-6,8,11-17,21/18
5000002400003540001
5000002400003540002
5000002400003540003
21/20,23,25
5000002400003540004
16/33,(18-26),(9-11),23
5000002400003770001
2/40,8/35,1,3,4
5000002400003770002
(13-25),(2-52)
5000002400003820001
(27-35),(54-60),45,47,(61-67)
5000002400003820002
78/23,80/42,82/13,84,88
5000002400003820003
34/14,5,(7-15),16,18,24,28,30,32
5000002400004080001
2/12,14/20,1,3,5,4
5000002400004080002
(31-43),(38-46)
5000002400004080003
5000002400004080004
45,47,48,50,52,54,53/70,51/31
5000002400004080005
(22-36),(41-49)
5000002400004230001
(40-58),55,(59-77),78,81
5000002400004230003
86,90,(138-150),207-227,199
5000002400004230004
142108
22/49,33/44,35/33,28,26,29,37
5000002400004300001
36,52,54,39
5000002400004300002
19,(16-22),(28-34),(31-37),(53-57)
5000002400004880001
47,44,46
5000002400004880002
11/1,3,4
5000002400004880003
1/37,1/44,5,11-14,20,22,28,41-47
5000002400005070001
21,30
5000002400005070002
5000002400005240001
(14-18),25
5000002400005240002
5000002400005700001
(15-23),16,18,(22-30),20/7
5000002400005700002
37,41,47
5002700100000010001
141205
46247501000
15,19,21,23,25,27,31
5002700100000010002
141207
1-6,9
5002700100000600001
6,8,10/2,12,(14-24)
5002700100000600002
(29-39),29,35,35,37,37,39,41/12
5002700100000630001
42,42,44,50,52ª1,52ª2,52ª3,52ª4,52ª5
5002700100000630002
1-7,7,8/2,9/2,10,11,11,13-22,(24-32)
5002700100000630003
44
5002700100000630004
5002700100000630005
5002700100000650001
8-33
5002700100000650002
141202
1,3-6,(8-12),4,6,10,11,15,21/35,25/1
5002700100000660001
(25-33),27,30,(43-49),46,53
5002700100000660002
18,20,20,26,28,(34-44),48,50
5002700100000660003
2-19,4,9,12,17,19
5002700100001050001
141201
1,18,20,20
5002700100001230001
3,6,12,14-16,19,21-25
5002700100001230002
1,2,2,2,2,9,9,(10-14),15,15,22
5002700100001370001
(18-40),22,35,35,35,37,37,38,39
5002700100001370002
40,40,41,41,43-46,43,44,(48-52)
5002700100001370003
(174-180)
5002700100001370004
1,3-9,8,(11-33),(47-53),54-173
5002700100001370005
(175-181),182-185
5002700100001370006
4-23,25,27,29,33,35
5000002800000200001
142200
46470000000
26,28,30,32,34,36-119
5000002800000200002
142206
1-27,45/17,63,65
5000002800000500001
142201
21-60
5000002800000590001
142207
5000002800000590002
60-102
5000002800000680001
142214
(1-7),9-58
5000002800000680002
142203
5000002800000680003
4,6/1
5000002800000750001
11-59
5000002800000750002
142211
1-109,(110-128)
5000002800000770001
106/6,(111-135)
5000002800000770002
148/2,(137-241)
5000002800000770003
(130-240)
5000002800000770004
4-18,21,23,46/20,48/19
5000002800000820001
26-66
5000002800000820002
(1-9),10-28
5000002800000950001
5000002800000950002
5000002800000980001
5000002800000980002
4-11,(19-25)
5000002800001010001
(16-22)
5000002800001010002
5000002800001070001
5000002800001070002
142205
5000002800001070003
3-13
5000002800001100001
14-44
5000002800001100002
(69-79),80-142
5000002800001150001
1-68,(70-76)
5000002800001150002
1,5,7,8,9/45,10
5000002800001600001
(90-100),105-131
5000002800001640001
4-89,(93-103)
5000002800001640002
142209
5000002800001640003
142210
5000002800002010001
5000002800002020001
54-113
5000002800002020002
(24-40),41-49,(51-69)
5000002800002230001
1-20,(21-39)
5000002800002230002
4-9,35
5000002800002330001
5000002800002330002
5000002800002370001
12-40
5000002800002370002
1-49,(51-999)
5000002800002390001
41/12,75/7,(50-90)
5000002800002390002
77/12,(92-998)
5000002800002390003
1-53,(55-67),73,79,83
5000002800002760001
(54-68),69-181
5000002800002760002
1-62,(64-70)
5000002800002810001
(65-75),76-124
5000002800002810002
1-30,(31-41)
5000002800002840001
(32-42),43-137
5000002800002840002
(12-22),(19-29)
5000003000000550001
141411
5047
46483000000
(2-8),(7-17)
5000003000000550002
141406
33/2,(3-7),(4-38),35,40-55,(56-68)
5000003000000720001
141407
(70-88)
5000003000000720002
141410
6-10,12-14,16,17,18,18
5000003000000760001
4/1,1-3
5000003000000760002
1-24,(25-49),26,28,30,32,34,38,44
5003700100000230001
142304
5048
46256501000
(46-128),36,40,42
5003700100000230002
142307
1-84
5003700100000670001
142306
85-101,101,101
5003700100000670002
142300
5003700100000780001
142301
3-150
5003700100000780002
5003700100001460001
(2-38),(47-85)
5003700100001460002
1-11,13,18
5200000100000080001
603016
5256
22401362000
(12-28),(15-25)
5200000100000080002
603083
1-22,24-999
5200000100000090001
603043
23
5200000100000090002
603111
5200000100000110001
603089
5262
22401379000
(141-189),191,(150-192)
5200000100000110002
603146
(191-193)
5200000100000110003
603057
(116-148),(109-139)
5200000100000110004
603105
5200000100000140001
603070
5257
22401365000
5200000100000140002
603159
5200000100000190001
603050
5263
22401382000
5200000100000190002
603128
5200000100000240001
603062
5261
22401376000
(9-19),(10-20),21-999
5200000100000240002
603144
5200000100000280001
603081
5200000100000280002
5200000100000290001
603148
5259
22401370000
5200000100000290002
603037
1-3,(5-11)
5200000100000440001
603115
5260
22401373000
5200000100000450001
603028
5200000100000450002
603108
5200000100000590001
5200000100000590002
5200000100000770002
(19-93),(34-92),94-99
5200000100000770003
5200000100000780001
(2-8),10,(12-98)
5200000100000780002
603000
5,9,9,9
5200000100000780003
(59-121)
5200000100000780004
603024
5200000100000780005
(100-106),110,118
5200000100000780006
603006
1-31,33-999
5200000100000820001
5200000100000820002
1-6,7,9,10,18
5200000100000860001
603079
109-999
5200000100000860002
603157
(20-82),(21-85),86,(99-107)
5200000100000860003
603044
84,(87-97),(88-108)
5200000100000860004
(1-23),2,(6-18)
5200000100001070001
603005
(22-52),25,(31-65)
5200000100001070002
603155
(54-82),(71-93)
5200000100001070003
(1-33),(2-24)
5200000100001080001
(28-32),(35-39),(40-52),43,(47-51)
5200000100001080002
17,17,28-999
5200000100001160001
603053
5200000100001160002
603095
15
5200000100001160003
603065
10,12,16,20
5200000100001330001
14,14,17-19
5200000100001330002
25,27,31,33,38-999
5200000100001330003
1-8,(10-14)
5200000100001340001
603014
(9-999),(16-998)
5200000100001340002
1-14,16-999
5200000100001350001
5200000100001350002
603074
5200000100001410001
(26-32),34-174
5200000100001410002
1,1 ,3
5200000100001460001
209,211,(225-229),166
5200000100001460003
603136
(137-179)
5200000100001460004
(5-135),(14-72)
5200000100001460005
(74-94)
5200000100001460006
603106
(96-108),(181-201),(122-202),203-207
5200000100001460007
603122
(1-3),(7-9),(11-15),16-999
5200000100001470001
3¡,5,5,(2-14)
5200000100001470002
(1-9),(8-12),17,18,18
5200000100001490001
15,29,(37-999),(22-998)
5200000100001490002
5200000100001560001
(20-998),(23-999)
5200000100001560002
603147
10-21
5200000100001570001
5200000100001570002
5200000100001630001
603098
2,2 
5200000100001630002
603022
(2-54),(1-65)
5200000100001800001
603011
5258
22401368000
(56-998),(67-999)
5200000100001800002
603140
1-26,28
5200000100001860001
27,29-999
5200000100001860002
1-24,32-999
5200000100001980001
(25-31)
5200000100001980002
(1-13),(17-23),(2-22)
5200000100002130001
(103-999),(192-999)
5200000100002130002
603137
5200000100002130003
(35-57),(98-176)
5200000100002130004
603009
5200000100002130005
603104
(68-96)
5200000100002130006
(25-31),(34-58),23
5200000100002130007
(59-101),(178-186)
5200000100002130008
603107
(62-66),70
5200000100002130009
17-20,25
5200000100002160001
5200000100002160002
1-10,12-15,17
5200000100002250001
11,16,18-999
5200000100002250002
5200000100002280001
(39-45),(32-34)
5200000100002280002
(36-98),(47-99),100,102,110,110
5200000100002280003
1-3,16-999
5200000100002340001
603061
(4-14),(5-15)
5200000100002340002
603073
1,3,(2-12)
5200000100002400001
(14-998),(5-999)
5200000100002400002
603109
5200000100002410001
5200000100002410002
5200000100002460001
603032
(19-25),(20-24),26-999
5200000100002460002
603076
5200000100002460003
603029
1-6,8,10-33,45-53,67-101,103-140
5200000100002480001
603116
102,145,155,159,161,165,167,171,175
5200000100002480002
603167
142-144,146-154,156-158,160,162-164
5200000100002480003
166,168-170,172-174,186-190,192
5200000100002480004
181-185,191,193,199,201
5200000100002480005
194-200,202-999
5200000100002480006
5200000100002480007
9,34-44,54-56,62-66
5200000100002480008
57-61
5200000100002480009
141
5200000100002480010
(5-67),(22-66),68-999
5200000100002500001
1,3,(2-20)
5200000100002500002
5200000100002530001
603033
5200000100002530002
603124
177-179,187-189,230-234,240,240¡,250
5200000100002550001
(123-137),(147-153),(152-164),141
5200000100002550002
193
5200000100002550003
5200000100002550004
603134
1-115,(140-150)
5200000100002550005
(2-10),(1-15),21,23,(24-34)
5200000100002670001
(12-16),22,25,29,27/24,36/27,38/22
5200000100002670002
5200000100002670003
5200000100002690001
5200000100002690002
1,8-999
5200000100002780001
603132
2-7
5200000100002780002
5200000100002830001
(37-71),(48-72),73-999
5200000100002830002
1-29,31,33,35-999
5200000100002840001
(30-34)
5200000100002840002
1-24,40
5200000100002880001
25-39,41-49
5200000100002880002
5200000100002880003
1-8,11-999
5200000100002910001
603093
9,10
5200000100002910002
603163
5200000100002980001
29-999
5200000100002980002
1-17,19,21,23-999
5200000100003060001
5200000100003060002
603001
1-36,38-999
5200000100003090001
603086
5200000100003090002
603002
5200000100003130001
(11-17),(24-30)
5200000100003130002
(22-34),35-999
5200000100003140001
603135
(2-20),(1-33)
5200000100003140002
603034
1,1,(5-11),13,(15-21),(2-26)
5200000100003190001
5200000100003190002
25,(28-34),(35-43),(40-44)
5200000100003190003
5200000100003520001
5200000100003520002
5200000100003550001
5200000100003550002
5200000100003620001
(31-37),38-999
5200000100003620002
603010
5200000100003760001
23-32
5200000100003760002
33-99
5200000100003760003
11,17,18,24,26
5200000100003800001
3,4
5200000100003800002
25,25,27-37,38-40
5200000100003800003
5200000100003830001
13/2,(14-62),(19-67)
5200000100003830002
64,(68-130),(136-162),168,65,(69-145)
5200000100003830003
5200000100003840001
603004
30,(32-42),(31-45)
5200000100003840002
603101
43,44
5200000100003890001
1-42,45-999
5200000100003890002
5200000100003910001
603059
(1-19),20-999
5200000100003910002
(1-16),(2-10)
5200000100004240001
603141
(12-998),(17-999)
5200000100004240002
603152
(7-999),(8-999)
5200000100004270001
5200000100004340001
(31-999)
5200000100004340002
5200000100004340003
5200000100004350001
5200000100004350002
2-10,16,20,26,28,47,49
5200000100004440001
30,49,51-100,105
5200000100004440002
1-3,5,7-9
5200000100004600001
4,6,10-999
5200000100004600002
(2-20),(1-45)
5200000100004610001
(115-345),(166-346),347-999
5200000100004610002
603003
(60-164),(47-113)
5200000100004610003
603094
5200000100004670001
5200000100004670002
5200000100004680001
603138
2,(1-19)
5200000100004680002
5200000100004680003
5200000100004770001
(16-44),45-999
5200000100004770002
603158
(15-43)
5200000100004770005
603139
5200000100004790001
5200000100004790002
1-48,(51-57)
5200000100004840001
603142
49,(50-60),65
5200000100004840002
603018
5200000100004870001
5200000100004870002
5200000100005070001
5200000100005070002
1-4,6,7,8,10,12-16,17,18-999
5200000100005080001
5200000100005110001
2,16,24,26
5200000100005110002
5200000100005200001
603047
5200000100005200002
1-11,(13-19),21-999
5200000100005210001
603041
(12-16)
5200000100005210002
5200000100005300001
5200000100005300002
5200000100005310001
5200000100005310002
(1-47),(2-42)
5200000100005360001
(44-80),(49-67),73,75,(87-109)
5200000100005360002
(82-100)
5200000100005360003
110-999
5200000100005430001
13,(17-109),(18-108)
5200000100005430002
603054
1-12,14-16
5200000100005430003
5200000100005450001
5200000100005450002
603123
5200000100005450003
5200000100005540001
(9-19),14,20-999
5200000100005540002
5200000100005540003
5200000100005650001
24,28,28¤,30
5200000100005650002
(37-61)
5200000100005650003
(88-106),114 ,(95-105),111,(115-127)
5200000100005650004
11-31
5200000100005650005
(32-54)
5200000100005650006
(72-82),86,(75-93)
5200000100005650007
603064
(56-70)
5200000100005650008
5200000100005650009
603090
5200000100005680001
(11-39),(16-30),(36-64),68
5200000100005680002
1-31,33,35,37-999
5200000100005830001
24/9,32,34,36
5200000100005830002
5200000100005850001
603087
5200000100005850002
1-14,16-99
5200000100005960001
5200000100005960002
(6-48),(25-33)
5200000100006070001
(1-13),2,4,(17-23)
5200000100006070002
5200000100006180001
5200000100006180002
1-75,77,79-999
5200000100006230001
76,78,78
5200000100006230002
5200000100006450001
5200000100006450002
14,17,19-21,23-999
5200000100006540001
1-13,15,16,18,22
5200000100006540002
1-46,69,71,75,77,69 ,77 ,69,77
5200000100006610001
(47-67),(48-80),73,79,81-999
5200000100006610002
5200000100006630001
(21-29),33-45
5200000100006630002
5200000100006640001
5200000100006640002
(1-7),(11-17),(4-20)
5200000100006660001
(19-27),29,(24-30),31-35,38/2,39
5200000100006660002
5200000100006700001
2,2 ,(4-10),7¡,7
5200000100006700002
603035
5200000100006780001
(42-60),(41-59),61-999
5200000100006780002
5200000100006830001
(1-27),38/2,46-84,90
5200000100006830002
(2-30),31
5200000100006830003
(1-73),(6-52)
5200000100006900001
5200000100006900002
(232-292)
5200000100006900003
(294-300)
5200000100006900004
298
5200000100006900005
303,(302-350)
5200000100006900006
603092
343
5200000100006900007
(215-233)
5200000100006900008
(235-341),(345-351),352-999
5200000100006900009
(75-213)
5200000100006900010
(54-230)
5200000100006900011
5200000100006940001
1,2-999
5200000100006940002
1,5,9-999
5200000100006970001
(2-8),3,7,11
5200000100006970002
1-42,44,46-77,79,81,83-999
5200000100007130001
43 ,43,45,45 ,78,80,82
5200000100007130002
1-5,7-10
5200000100007150001
6,11-999
5200000100007150002
1-3,11-999
5200000100007160001
5200000100007160002
(1-37),(4-42)
5200000100007190001
39,41,(46-52)
5200000100007190002
(43-111),(56-100)
5200000100007190003
2,6,8-999
5200000100007310001
7/24,1,3-5,7
5200000100007310002
1,3-11,13-19,21-25
5200000100007360001
2,12
5200000100007360002
20,26-999
5200000100007360003
5200000100007380001
41-999
5200000100007380002
5200000100007530001
5200000100007530002
5200000100007640001
27-64,66
5200000100007640002
65,66,67-999
5200000100007640003
5200000100007690001
(12-26),(13-23)
5200000100007690002
5200000100007690003
5200000100007800001
5200000100007800002
5200000100007930001
5200000100007930002
1,(6-10)
5200000100007990001
(5-11),14,15,16,17,21,(24-32),36 
5200000100007990002
(65-95),(68-72),82,99,(88-108)
5200000100007990004
53,57,61,63,64,66,(74-80)
5200000100007990006
5200000100008050001
5200000100008050002
5200000100008200001
5200000100008200002
5200000100008210001
603040
5200000100008210002
5200000100008260001
5200000100008260002
5200000100008280001
40-999
5200000100008280002
5200000100008460001
5200000100008460002
5200000100008570001
5200000100008570002
5200000100008710001
24,30,30,32,(39-47),51,53
5200000100008710002
26,33,35,35/2,33/45,37
5200000100008710003
(1-63),(2-16)
5200000100008750001
(18-998),(65-999)
5200000100008750002
5-21
5200000100008870001
3,3¡,4
5200000100008870002
(1-9),10,10
5200000100008880001
5200000100008880002
1,2,4,5,7-9,11,13-15,17-21,23-999
5200000100008890001
3,6,10,12,16,22
5200000100008890002
26,31,47
5200000100008980001
2,(4-16),7,7 ,20
5200000100008980002
5200000100009000001
5200000100009000002
5200000100009030001
2,4-52,54-999
5200000100009030002
5200000100009030003
5200000100009040001
33-49
5200000100009040002
5200000100009160001
21-37
5200000100009160002
38-54
5200000100009160003
5200000100009380001
20,22,24,28-47,51
5200000100009380002
3-10,17-27
5200000100009380003
144 ,167,173,(180-194),198
5200000100009460001
603126
(1-159),(14-142),163,165
5200000100009460002
5200000100009470001
5200000100009470002
1-49
5200000100009540001
5200000100009540002
(1-49),(2-66)
5200000100009650001
(51-99),(68-118)
5200000100009650002
5200000100009920001
5200000100009920002
(2-8),10,14,16
5200000100009940001
(31-41),(40-42),46-48
5200000100009940002
5,5 ,5¡,9,11,(15-23),(20-22)
5200000100009940003
1-11,13-34
5200000100010190001
5200000100010190002
5200000100010220001
19-91
5200000100010220002
35,92-999
5200000100010220003
5200000100010250001
5200000100010250002
(1-9),(2-12),13
5200000100010260001
13,15,16,18,22
5200000100010260002
1-24,26-41
5200000100010280001
25,42-999
5200000100010280002
1-14,15,16-20
5200000100010340001
1,21,22,22,26,24
5200000100010340002
603052
24/1,24«,24¬,24á,24¯,24à,24â,24/24,30,32
5200000100010340003
1,1 ,1,2,4-999
5200000100010370001
5200000100010370002
(1-19),16,23-999
5200000100010390001
(2-14),18,20-22
5200000100010390002
(1-9),11-999
5200000100010480001
603096
5200000100010480002
5200000100010490001
5200000100010490002
1-7,9-13,15-32,(34-62),64-999
5200000100010520001
8,14,(33-41),(55-63)
5200000100010520002
5200000100010550001
5200000100010550002
18,20,(19-31)
5200000100010610001
5200000100010610002
1-17,(22-32),33
5200000100010610003
5200000100010640001
5200000100010640002
(1-81),(2-66),82-999
5200000100010750001
5200000100010750003
1-18,20-22,24-28,30-999
5200000100010800001
19,19 ,23,29
5200000100010800002
(12-22),24,(17-25)
5200000100011020001
5200000100011020002
6,(1-11),8
5200000100011020003
5200000100011040001
5200000100011040002
5200000100011250001
5200000100011250002
1-35,37,39-999
5200000100011330001
5200000100011330002
5200000100011410001
5200000100011410002
5200000100011510001
(41-49),42,46,52-56
5200000100011510002
1-7,9,11-999
5200000100011590001
10,8
5200000100011590002
5200000100011620001
5200000100011620002
5200000100011650001
5200000100011650002
1,1,4,6,6
5200000100011840001
10/3,10/4,29-999
5200000100011840002
(3-27),8,10,10/1,10/2,12
5200000100011840003
5200000100011850001
603038
5200000100011850002
7,8,9,15
5200000100011980002
1-25,26,28,30-999
5200000100012010001
25,27,29
5200000100012010002
1-27,29,29 ,29,31
5200000100012020001
(28-52),(33-53),54-999
5200000100012020002
2,4,9,10
5200000100012090001
11-18,20,24
5200000100012090002
19,22,(23-27),26
5200000100012090003
5200000100012180001
5200000100012180002
1,5,6,9-999
5200000100012240001
2,3,4,7,8
5200000100012240002
5200000100012260001
5200000100012260002
1-12,14,16,17,19-999
5200000100012320001
603153
13,15,18
5200000100012320002
5,5
5200000100012460001
5200000100012460002
6,11,13
5200000100012460003
1,(2-40),25,19,(33-51),(50-68)
5200000100012650001
5,7,3,3
5200000100012650002
5200000100012690001
5200000100012690002
1-20,31,30 
5200000100012720001
21-24
5200000100012720002
5200000100012720003
(1-21),(2-26)
5200000100012740001
5200000100012740002
5200000100012740003
26,26,(28-54),60
5200000100012740004
5200000100013000001
(21-35),(32-36),37-999
5200000100013000002
1-56,58-111,(113-121),122-999
5200000100013110001
57,(112-120)
5200000100013110002
(2-24),25-999
5200000200000020001
606015
5249
22421000000
5200000200000020002
606026
(11-23)
5200000200000020003
606037
(8-24),1
5200000200000030001
606023
9/8,9,(11-21)
5200000200000030002
(26-48),(23-49)
5200000200000030003
606032
(2-6),3
5200000200000030004
606000
(2-38),(1-17)
5200000200000040001
606019
(19-31)
5200000200000040002
(40-82),(33-83),84-999
5200000200000040003
606024
2,4,(1-5)
5200000200000080001
(6-24),(7-9)
5200000200000080002
(26-60),62,(17-49)
5200000200000080003
5200000200000080004
606029
(62-74),76-999
5200000200000080005
606025
5200000200000090001
(2-30),(3-11)
5200000200000090002
(13-29),31-999
5200000200000090003
606007
5200000200000130001
5200000200000130002
(22-38)
5200000200000130003
(40-50),(31-49),51-999
5200000200000130004
606008
5200000200000160001
5200000200000160002
606010
(16-38),(13-39),40-999
5200000200000160003
5200000200000180001
5200000200000180002
(25-33),34,36-999
5200000200000180003
(14-30),(3-13)
5200000200000190001
1,(2-12),(15-29),31-999
5200000200000190002
(2-24),1
5200000200000300001
(26-32)
5200000200000300002
(3-39)
5200000200000300003
(34-52),(41-49)
5200000200000300004
(54-60),(51-73)
5200000200000300005
(62-74),(75-93)
5200000200000300006
(76-116),(95-115),117-999
5200000200000300007
606016
5200000200000330001
606002
5200000200000330002
606034
(46-999)
5200000200000330003
606031
5200000200000340001
(2-30),17,25
5200000200000340002
(32-56),57
5200000200000340003
606036
(39-55),58-999
5200000200000340004
(10-28),(1-19)
5200000200000380001
(2-8),
5200000200000380002
(21-35)
5200000200000380003
5200000200000380004
5200000200000380005
(2-22),(1-11)
5200000200000400001
(13-23),24-999
5200000200000400002
5200000200000410001
5200000200000410002
5200000200000430001
(2-16),18-999
5200000200000430002
(2-46),(1-35),48
5200000200000440001
(48-64),(43-53)
5200000200000440002
(66-82),(55-83),84-999
5200000200000440003
5200000200000470001
(2-16),(5-15)
5200000200000470002
5200000200000470003
(28-38),(17-39),40-999
5200000200000470004
(2-8),(1-9)
5200000200000500001
(10-22)
5200000200000500002
(11-21),23-999
5200000200000500003
(1-27),(16-20)
5200000200000530001
(29-999),(2-14),(22-999)
5200000200000530002
606039
5200000200000550001
(24-36),(29-37),38-999
5200000200000550002
(2-10),(1-13),15
5200000200000570001
(12-28),(15-29),30-999
5200000200000570002
5200000200000580001
(6-34),(1-35),36-999
5200000200000580002
4,(1-15)
5200000200000600001
(2-16),17-999
5200000200000600002
(2-38),(1-33)
5200000200000650001
(40-64),(35-63),65-999
5200000200000650002
59,59,59,61,62
5200000200000650003
5200000200000660001
(64-78)
5200000200000660002
(55-93)
5200000200000660003
(80-92),94-999
5200000200000660004
606033
5200000200000670001
(24-36),(1-41)
5200000200000670002
5200000200000670003
5200000200000680001
5200000200000680002
(2-10),(1-63)
5200000200000700001
5200000200000700002
(28-64),65-999
5200000200000700003
(2-8),(1-11)
5200000200000740001
10,12,13-999
5200000200000740002
(2-8),10
5200000200000750001
(10-16),(1-17),18-999
5200000200000750002
5200000200000780001
21,23,25
5200000200000780002
(22-56),(27-57),58-999
5200000200000780003
5200000200000790001
(24-80),(35-79),81-999
5200000200000790002
(2-24),28,(1-17)
5200000200000800001
(19-29),30-32
5200000200000800002
(10-30),(11-29)
5200000200000810001
28
5200000200000810002
(32-44),(31-57)
5200000200000810003
(46-54)
5200000200000810004
5200000200000810005
(77-101)
5200000200000810006
(56-86)
5200000200000810007
(88-102),103-999
5200000200000810008
2,(6-14)
5200000300000060001
607188
5254
22503000000
(1-19),4,4/1,4/2
5200000300000060002
607189
(6-10),7
5200000300000100001
607182
(1-5),(11-25)
5200000300000100002
607185
5200000300000170001
607186
2,4,6-13
5200000300000170002
5200000300000270001
5200000300000270002
607187
21,21/2,23,27,(26-42)
5200000300000360001
(11-17),(18-24)
5200000300000360002
(3-9),(4-16)
5200000300000360003
(7-13),(14-18)
5200000300000370001
607183
(17-27)
5200000300000370002
5200000300000390001
5200000300000390002
(22-50),(23-43)
5200000300000400001
(45-59),(54-60)
5200000300000400002
(2-20),(7-21)
5200000300000400003
5200000300000400004
(2-28),(1-27)
5200000300000440001
(8-12),(19-29)
5200000300000550001
(20-30),(31-41)
5200000300000550002
5,9
5200000300000550003
(1-21),(18-28)
5200000300000600001
5200000300000600002
5200000300000610001
(18-26),(19-29)
5200000300000610002
1,(4-6)
5200000300000760001
2,3,5,8,10
5200000300000760002
13,19,21,48
5200000300000780001
(2-46),(1-11),(23-999),(50-100)
5200000300000780002
5200000300000880001
5200000300000880002
5200000300000890001
(16-26),(17-27),28-999
5200000300000890002
1,(2-10),13,15,19
5200000300000900001
23,27
5200000300000900002
(2-44),(1-67)
5200000300000920001
52,54,75
5200000300000920002
(3-9),(4-12)
5200000300000930001
(11-47),(18-26)
5200000300000930002
(29-37),(32-46)
5200000300000940001
(7-19),(18-30)
5200000300000940002
(8-16)
5200000300000940003
5200000300000970001
(4-24),(11-37)
5200000300000970002
5200000400000140001
607220
5243
22403000000
3-26,28-999
5200000400000140002
607224
5200000400000170001
607225
5200000400000170002
607223
(2-38),(1-49)
5200000400000330001
(40-48),50-999
5200000400000330002
5200000400000500001
2,(4-998),(1-999)
5200000400000500002
(1-7),(2-22)
5200000400000630001
607226
(9-29)
5200000400000630002
607227
(24-998),(31-999)
5200000400000630003
5200000400000640001
56-998
5200000400000640002
5200000400000710001
607228
1-3,7-999
5200000400000710002
607230
(1-57),59,(2-78)
5200000400000750001
59,(61-999),(80-998)
5200000400000750002
(2-22),(1-45),47,(53-999)
5200000400000820001
(24-998),49,51
5200000400000820002
139,141
5200000400000850001
(198-210),(123-137)
5200000400000850002
(2-196),(212-998),(1-121),(143-999)
5200000400000850003
(1-35),(2-40)
5200000400000860001
(37-999),(42-998)
5200000400000860002
607233
9,(2-16)
5200000400000880001
(1-999),(18-998)
5200000400000880002
5200000400001050001
(14-998),(3-999)
5200000400001050002
5200000400001160001
(5-999),(2-998)
5200000400001160002
5200000400001330001
2,(14-998),(1-999)
5200000400001330002
(2-36),(1-35),(48-96),(43-81)
5200000400001450001
(98-998),(83-999)
5200000400001450002
(2-68),(1-47),(51-69)
5200000400001720001
49,70-999
5200000400001720002
5200400001100230001
606400
5244
22205555000
5200400001100230002
606425
5200400100002310001
22205501000
5200400100002310002
606402
5200400100002320001
41-175
5200400100002320002
606403
176-999
5200400100002320003
606408
5200400100002350001
5200400100002350002
5200400100002460001
5200400100002460002
(2-62),(27-61),63-999
5200800100000010001
606440
5246
22211501000
(1-25),57
5200800100000010002
606441
5200800100000420001
606443
101-999
5200800100000420002
606448
(1-31),(2-10)
5202800100000120001
607015
5247
5251
22238501000
(12-998),(33-999)
5202800100000120002
607018
5202800100000290001
607012
(87-999),(98-998)
5202800100000290002
607014
(1-85),(2-88)
5202800100000300001
(87-999),(90-998)
5202800100000300002
607011
119-999
5202800100000310001
5202800100000310002
5202800100000330001
5202800100000330002
5202800100000350001
5202800100000350002
(1-141),(2-164)
5202800100000400001
(143-999),(166-998)
5202800100000400002
(23-999),(32-998)
5202800100000490001
(1-21),(2-30)
5202800100000490002
(1-13),(2-28)
5202800100000520001
(15-999),(30-998)
5202800100000520002
607017
(93-103),(102-126)
5202800100000530001
(1-91),(2-100)
5202800100000530002
(110-998),(119-999)
5202800100000560001
(1-117),(2-108)
5202800100000560002
5202800100000700001
5202800100000700002
(77-999),(100-998)
5202800100000710001
(1-75),(2-98)
5202800100000710002
5202800100000720002
5202800100001410001
5202800100001410002
1-17,19
5202800100001420001
18,20-999
5202800100001420002
5202800100001470001
5202800100001470002
1-50,52,54,56-999
5202800100001820001
53,51,55
5202800100001820002
5202800100001870001
5202800100001870002
5202800100001910001
5202800100001910002
(1-47),(2-40)
5202800100001970001
5202800100002040001
5202800100002040002
5202800100002060002
(97-999),(116-998)
5202800100002120001
5202800100002120002
(87-95),(98-114)
5202800100002120003
5203200007600010001
606131
5252
22242555000
5203200007600010002
606130
85
5203200100000580001
606106
22242501000
1-83
5203200100000580002
606100
12,20,23,28 ,30 
5203200100001680001
606103
(2-10),(1-21),20 
5203200100001680002
37,47
5203200100001770001
1-36,38-46,48-999
5203200100001770002
29,31-32
5203200100001830001
2-28,30,33-90
5203200100001830002
5203200100002010001
606108
23,25-32,40-43,48-70
5203200100002390001
1-19,24
5203200100002390002
(52-66),(59-99)
5203200100002440002
606104
(1-177),(2-128)
5203200200000010001
606120
22242503000
(130-198),(179-199),200-999
5203200200000010002
606121
(1-111),(2-136)
5203200200000060001
(113-999),(138-999),136 
5203200200000060002
1-14,20-999
5203200200000080001
(2-10),11-999
5203200200000150001
5203200200000150002
5203200200000270001
1-3,7 ,7¡
5203200200000270002
1-6,17-999
5203200200000340001
7-16
5203200200000340002
5203200200000360001
5203200200000360002
(91-119),(90-118)
5203300100000010001
607762
5224
22243501000
(1-89),(2-88)
5203300100000010002
607760
5203300100000060001
(81-115),(70-100)
5203300100000060002
(81-109),(70-100)
5203300100000090001
5203300100000090002
5203300100000530001
(35-51),(32-48)
5203300100000530002
5203300100000590001
5203300100000590002
5203500000100020001
607490
5229
5226
22245551000
(20-40),(17-39)
5203500000100020002
607491
(2-58),(1-65)
5203500000100100001
(60-128),(67-107)
5203500000100100002
(2-88),(1-133)
5203500000100120001
(90-194),(135-269)
5203500000100120002
(2-52),(1-61)
5203500000100170001
(54-102),(63-117)
5203500000100170002
(137-143)
5203800100000280001
607500
22248501000
(1-135),(2-144)
5203800100000280002
607510
(1-9),(37-43),(2-12),(30-48),50-999
5204600100000580001
606540
5248
5236
22255501000
(11-35),(45-49),(14-28)
5204600100000580002
606541
5400000100000100001
630009
5405
50401379000
(27-97),(38-84)
5400000100000100002
630063
(99-999),(86-998)
5400000100000100003
630039
5400000100000170001
630015
5401
50401364000
5400000100000170002
630051
5400000100000180001
(13-999),(32-998)
5400000100000180002
5400000100000250001
5400000100000250002
630112
37,(39-999),(28-998)
5400000100000310001
5400000100000310002
35/1,40/1,40/2,40/3,40/4,40/5
5400000100000390001
630045
5404
50401377000
5400000100000390002
5400000100000390004
630034
(1-127),(2-122)
5400000100000550001
630017
(129-999),(124-998)
5400000100000550002
(1-37),(2-38)
5400000100000700001
(39-999),(40-998)
5400000100000700002
5400000100000710001
630049
5402
50401372000
(1-23),(2-18)
5400000100000850001
630098
5473
5408
50401384000
(25-999),(20-998)
5400000100000850002
630057
5400000100000910001
630091
5406
50401386000
(1-17),(21-71),(2-92)
5400000100000910002
630005
(73-77)
5400000100000910003
(79-999),(94-998)
5400000100000910004
(1-275),(2-282)
5400000100000940001
630008
(277-353),(284-366)
5400000100000940002
(355-999),(368-998)
5400000100000940003
5400000100001030001
630030
5409
50401382000
5400000100001030002
630025
(65-299),(303-449),(453-999)
5400000100001030003
630059
(2-268)
5400000100001030004
630097
451,301
5400000100001030005
630060
(34-998),(53-999)
5400000100001200001
630073
(30-32)
5400000100001200002
630092
5400000100001200003
630078
5400000100001200004
630064
5400000100001220001
(133-171),(181-183),187,(144-206)
5400000100001220002
(173-179),185,(189-239),251,(208-246)
5400000100001220003
630089
(3-37),(20-58)
5400000100001220004
630102
(39-131),(60-142)
5400000100001220005
(248-266)
5400000100001220006
(268-998),(253-999)
5400000100001220007
630124
5400000100001280001
(144-998),(225-227),(231-999)
5400000100001280002
630028
(2-14),(45-121)
5400000100001280003
(123-223),229,(16-142)
5400000100001280004
630083
5400000100001800001
630056
5400000100001800002
(1-19),(12-26)
5400000100001840001
5400000100001840002
83,85
5400000100001840003
630087
5403
50401374000
5400000100001840004
30,(32-998)
5400000100001840005
630024
(28-30)
5400000100001840006
630048
5400000100001920001
(25-57)
5400000100001920002
630077
(112-998),123
5400000100001920003
(20-38),59
5400000100001920004
(40-110),(61-121),(125-999)
5400000100001920005
630079
5400000100002170001
630099
5400000100002170002
(1-59),(2-130)
5400000100002270001
(61-999),(132-998)
5400000100002270002
5400000100002280001
(41-999),(20-998)
5400000100002280002
(1-55),(2-50)
5400000100002320001
(57-97),(52-86)
5400000100002320002
(99-999),(88-998)
5400000100002320003
630111
5400000100002330001
630004
5407
50401368000
5400000100002330002
(1-47),(2-64)
5400000100002380001
(49-999)
5400000100002380002
630010
(66-998)
5400000100002380003
5400000100002400001
(1-31),(35-999),(2-998)
5400000100002400002
5400000100002480001
630200
(1-13),17,(2-30)
5400000100002480002
(19-999),(32-998)
5400000100002480003
5400000100002490001
(3-87),(2-98)
5400000100002490002
(89-999),(100-998)
5400000100002490003
630126
5400000100002500001
(3-999),(4-998)
5400000100002500002
5400000100002590001
5400000100002590002
(2-24),(3-29)
5400000100002620001
5410
50401373000
(26-998),1,(31-999)
5400000100002620002
630084
5400000100002680001
5400000100002680002
23,24,25,26
5400000100002740001
(1-21),(27-999),(2-22),(28-998)
5400000100002740002
630107
5400000100002760001
(1-9),(4-998)
5400000100002760002
(11-999)
5400000100002760003
30/1,(23-81),(32-84)
5400000100002800001
630046
5400000100002800002
630037
(83-999),(86-998)
5400000100002800003
(1-999),18,20,(22-998)
5400000100002820001
630033
(2-16),20
5400000100002820002
630066
46
5400000100002830001
5400000100002830002
(2-44),(48-998)
5400000100002830003
(1-11),(2-32)
5400000100002880001
(13-137),(34-42),(46-144)
5400000100002880002
(189-999),(202-998)
5400000100002880003
(146-200),(167-187)
5400000100002880004
(139-165),44
5400000100002880005
(1-37),(2-18)
5400000100002980001
630032
(39-999),(20-998)
5400000100002980002
9,(39-999),(40-998)
5400000100002990001
(1-7),(11-37),(2-38)
5400000100002990002
80,114,116,(120-140)
5400000100003140001
(1-49),(8-60)
5400000100003140002
(125-999),(142-998)
5400000100003140003
(51-123),(62-78),(82-112),118
5400000100003140004
5400000100003140005
(1-67),(2-72)
5400000100003160001
72/1,72/2,(69-999),72,(74-998)
5400000100003160002
630120
(18-998),(17-999)
5400000100003170001
630106
5400000100003170002
630088
(1-27),(2-42),(56-58)
5400000100003250001
(165-999),(152-998)
5400000100003250002
(29-75),(44-50)
5400000100003250003
(77-163),(52-54),(60-150)
5400000100003250004
5400000100003270001
(1-31),(35-999)
5400000100003270002
5400000100003270003
(49-999),(44-998)
5400000100003280001
5400000100003280002
(1-999),(46-998)
5400000100003300001
5400000100003300002
5400000100003510001
(3-999),(16-998)
5400000100003510002
(1-91),(2-56)
5400000100003550001
(249-269),(150-176)
5400000100003550002
(271-999),(178-998)
5400000100003550003
(93-247),(58-148)
5400000100003550004
5400000100003580001
(39-87),(44-94)
5400000100003580002
(91-999),(96-998)
5400000100003580003
5400000100003680001
(21-999),(36-998)
5400000100003680002
(1-37),(2-36)
5400000100003690001
(39-69),(38-82),92,96
5400000100003690002
(71-79),(84-90),94
5400000100003690003
(81-999),(98-998)
5400000100003690004
1,(2-4)
5400000100003750001
1,(3-65),(6-32)
5400000100003750002
5400000100003750003
7,(15-999)
5400000100003790001
630132
(1-5),(9-13),(4-8)
5400000100003790002
2,(10-998)
5400000100003790003
(1-71),(2-30)
5400000100003860001
(149-191),(100-104)
5400000100003860002
(193-999),(106-998)
5400000100003860003
(73-147),(32-98)
5400000100003860004
(1-153),(2-140)
5400000100003940001
(155-207),(235-259),(142-216)
5400000100003940002
(209-233),(261-999),(218-998)
5400000100003940003
5400000100003960001
(25-999),(14-999)
5400000100003960002
630082
77
5400000100003990001
(1-25),(2-22)
5400000100003990002
(27-75),(79-999),(24-998)
5400000100003990003
5400000100004020001
(29-75),(18-70)
5400000100004020002
(77-999),(72-998)
5400000100004020003
(1-223),(2-406)
5400000100004080001
630001
(301-339),(408-530)
5400000100004080002
(341-355),(532-596)
5400000100004080003
630105
(357-999),(598-999)
5400000100004080004
(1-337),(2-216)
5400000100004090001
(339-999),(218-304)
5400000100004090002
(306-450)
5400000100004090003
(452-999)
5400000100004090004
630075
(1-101),(2-150)
5400000100004100001
(103-999),(152-998)
5400000100004100002
85,74
5400000100004160001
5400000100004160002
(37-83),(87-91),(40-72),76,78
5400000100004160003
(80-998),(93-999)
5400000100004160004
5400000100004170001
(2-12),(18-998),(1-999)
5400000100004170002
5400000100004220001
5400000100004220002
106/1,106/2,106/3,106
5400000100004260001
5400000100004260002
630123
(97-999),(98-104),(108-998)
5400000100004260003
(119-999),(120-998)
5400000100004280001
(71-117),(70-118)
5400000100004280002
(36-68),14,(35-69)
5400000100004280003
(1-33),(2-12),(16-34)
5400000100004280004
5400000100004310001
5400000100004310002
630096
(23-999),(22-52)
5400000100004310003
630071
5400000100004310004
630121
(11-999),6,(12-998)
5400000100004370001
630047
(5-9),2,4,8,10
5400000100004370002
(1-3)
5400000100004370003
(1-11),(2-16)
5400000100004390001
(13-999),(18-998)
5400000100004390002
5400000100004500001
(8-998),(1-999)
5400000100004500002
129,(133-195),199
5400000100004630001
630119
197,(201-231)
5400000100004630002
47/1,47/2,(93-127),(2-998),131
5400000100004630003
(1-47),(49-91)
5400000100004630004
(233-999)
5400000100004630005
(1-121),(2-30)
5400000100004640001
(123-999),(32-998)
5400000100004640002
5400000100004650001
630055
5400000100004650002
630117
62,64,68
5400000100004670001
630129
(1-999),(2-60),66,(70-998)
5400000100004670002
630020
(1-109),(2-48)
5400000100004700001
(111-999),(50-998)
5400000100004700002
(1-79),(2-62)
5400000100004780001
(81-999),(64-998)
5400000100004780002
(1-119),(2-124)
5400000100004820001
(121-999),(126-998)
5400000100004820002
(18-38)
5400000100004900001
5400000100004900002
(52-998)
5400000100004900004
(1-999),(2-16)
5400000100004900005
(1-25),(2-32)
5400000100004910001
(27-999),(34-998)
5400000100004910002
5400000100004960001
(2-998),(3-999)
5400000100004960002
(153-323),(110-352)
5400000100004980001
(325-999),(354-998)
5400000100004980002
(1-101),(2-102)
5400000100004980003
(103-151),(104-108)
5400000100004980004
(1-43),(2-62)
5400000100005260001
(45-47),(64-82)
5400000100005260002
(49-999),(84-998)
5400000100005260003
23,34
5400000100005430001
83,(85-999),92,100,(102-998)
5400000100005430002
(1-21),(25-83),(2-32),(36-90)
5400000100005430003
5400000100005430004
5400000100005590001
5400000100005590002
5400000100005650001
(1-21),(25-999),(2-26)
5400000100005650002
630136
5400000100005650003
1,(7-25),(29-101),(2-86)
5400000100005710001
5400000100005710002
630011
3/1,5,27,(103-213)
5400000100005710003
(215-329),(194-290)
5400000100005710005
(331-999),(292-998)
5400000100005710006
(88-192)
5400000100005710007
(77-179),(94-256)
5400000100005880001
179/2,(181-999),(258-348)
5400000100005880002
(1-75),(2-92)
5400000100005880003
(350-998)
5400000100005880004
5400000100005910001
(29-39),(2-998)
5400000100005910002
(142-148)
5400000100005980001
(1-13),35,44
5400000100005980002
(15-33),(37-185),(2-42),(46-140),146
5400000100005980003
(150-998),(187-999)
5400000100005980004
5400000100006060001
(1-31),(2-26)
5400000100006060002
(28-998),(33-73),(77-103)
5400000100006060003
630007
69,71,(75-85),(103-143),(44-94)
5400000100006070001
73,(87-101)
5400000100006070002
5400000100006070003
(145-999),(116-998)
5400000100006070004
(96-114)
5400000100006070005
5400000100006090001
5400000100006090002
(1-129),(2-138)
5400000100006170001
(131-231),(140-244)
5400000100006170002
(233-999),(246-998)
5400000100006170003
21/1,21
5400000100006220001
(1-19),(23-999)
5400000100006220002
5400000100006220003
(1-9),11,(2-30)
5400000100006260001
630054
(11-25),(32-44)
5400000100006260002
5400000100006260003
630110
5400000100006310001
5400000100006310002
5400000100006310003
630108
5400000100006310004
(3-15),(2-22)
5400000100006360001
(17-57)
5400000100006360002
1,61,(24-998)
5400000100006360003
5400000100006370001
5400000100006370002
(2-60),(1-999)
5400000100006390001
5400000100006390002
(1-123),(2-130)
5400000100006450001
(125-155),(132-166)
5400000100006450002
(157-999),(168-998)
5400000100006450003
5400000100006560001
5400000100006560002
(1-33),(37-103),(2-28)
5400000100006650001
35,(107-999),(32-998)
5400000100006650002
179,179/1,(232-998),(181-999)
5400000100006660001
5400000100006660002
5400000100006660003
(15-39),(26-42)
5400000100006660004
(41-77),(44-84)
5400000100006660005
(81-179),(104-230)
5400000100006660006
(2-16),(20-24),(1-13)
5400000100006660007
(88-102)
5400000100006660008
5400000100006660009
5400000100006680001
(103-999),(102-998)
5400000100006680002
(27-101),(32-100)
5400000100006680003
5400000100006720001
5400000100006720002
5400000100006770001
(5-999),(22-998)
5400000100006770002
5400000100006770003
5400000100006770004
(201-271),(118-128),288
5400000100006810001
(433-499),(340-998)
5400000100006810002
(1-41),(2-102)
5400000100006810003
(43-199),(104-116)
5400000100006810005
78,(92-998),89,(95-999)
5400000100006860001
5400000100006860002
(39-93),(36-76),(80-90)
5400000100006860003
5400000100007110001
(7-999),(4-998)
5400000100007110002
630128
5400000100007110003
630090
5400000100007160001
(1-999),(4-998)
5400000100007160002
5400000100007270001
(23-999),(26-998)
5400000100007270002
5400000100007290001
(21-71),(18-88)
5400000100007290002
(5-19),(8-16)
5400000100007290003
(73-999),(90-998)
5400000100007290004
(1-147),(2-204)
5400000100007300001
(149-341),(206-336)
5400000100007300002
(343-999),(338-998)
5400000100007300003
5400000100007340001
5400000100007340002
(1-233),(2-214)
5400000100007350001
(235-999),(216-998)
5400000100007350002
(1-129),(2-134)
5400000100007440001
(131-999),(136-998)
5400000100007440002
(1-41),(2-66)
5400000100007450001
(43-191),(68-122)
5400000100007450002
(124-998),(193-999)
5400000100007450003
(1-77),(2-66)
5400000100007530001
(79-999),(70-998)
5400000100007530002
(1-57),(2-50)
5400000100007760001
(59-999),(52-998)
5400000100007760002
13/1,7,11,14
5400000100007770001
630052
(1-5),9,13,(15-999),(2-12),(16-998)
5400000100007770002
630019
5400000100007790001
(23-79),(30-80)
5400000100007790002
(81-999),(82-998)
5400000100007790003
5400000100007800001
(15-999),(18-998)
5400000100007800002
35,(39-999)
5400000100007810001
33,37,20
5400000100007810002
5400000100007810003
18,(22-998)
5400000100007810004
5400000100007820001
2,3
5400000100007820002
5400000100007880001
(7-999),(18-998)
5400000100007880002
5400000100007910001
(47-999),(56-998)
5400000100007910002
(1-59),(63-999),(2-58)
5400000100008000001
61,(60-998)
5400000100008000002
5400000100008110001
(7-999),(10-12)
5400000100008110002
(14-998)
5400000100008110003
5400000100008180001
(27-999),(24-998)
5400000100008180002
5400000100008240001
(31-999),(2-998)
5400000100008240002
(3-21),(4-12)
5400000100008250001
(23-999),(14-998)
5400000100008250002
(1-207),(2-214)
5400000100008340001
(209-999),(216-998)
5400000100008340002
26/1,(49-999),(28-998)
5400000100008500001
(1-47),(2-26)
5400000100008500002
(1-31),(35-999),(2-98),(102-998)
5400000100008510001
33,100
5400000100008510002
5400000100008570001
(29-49)
5400000100008570002
(51-999),(2-998)
5400000100008570003
5400000100008580001
5400000100008580002
(25-89),(26-88)
5400000100008590001
(95-999),(90-998)
5400000100008590002
(2-24),(1-23)
5400000100008590003
5400000100008600001
(1-43),(20-30)
5400000100008600002
(117-139)
5400000100008600003
(141-145)
5400000100008600004
(147-161)
5400000100008600005
5400000100008600006
(32-98),(47-115)
5400000100008600007
5400000100008600008
27,29,(61-193),(122-266)
5400000100008620001
(1-25),(31-59),(2-120)
5400000100008620002
(195-205),(268-270)
5400000100008620003
(207-999),(272-998)
5400000100008620004
5400000100008640001
(25-93),(22-94)
5400000100008640002
(95-999),(96-998)
5400000100008640003
5400000100008680001
5400000100008680002
5400000100008750001
5400000100008750002
5400000100008750003
(7-23)
5400000100008750004
5400000100008750005
5400000100008750006
5400000100008870001
630003
5400000100008870002
(1-93),(2-58)
5400000100008900001
(95-999),(60-998)
5400000100008900002
(1-101),(2-36)
5400000100008960001
(103-119),(38-52)
5400000100008960002
(121-999),(54-998)
5400000100008960003
(1-9),(2-40)
5400000100009000001
(11-999),(42-998)
5400000100009000002
630027
(1-3),(7-53)
5400000100009010001
(157-999),(192-998)
5400000100009010002
(55-155),(2-190),5
5400000100009010003
5400000100009070001
(51-999),(50-998)
5400000100009070002
5400000100009100001
5400000100009100002
5400000100009170001
5400000100009170002
(38-44)
5400000100009170003
5400000100009170004
5400000100009180001
5400000100009180002
5400000100009340001
(89-999),(82-998)
5400000100009340002
5400000100009370001
(21-999),(18-998)
5400000100009370002
5400000100009430001
(77-999),(78-998)
5400000100009430002
(1-69),(2-78)
5400000100009450001
(71-999),(80-998)
5400000100009450002
(155-169),(136-150)
5400000100009480001
(171-999),(152-998)
5400000100009480002
(2-134),(1-153)
5400000100009480003
114/1,(83-95),(116-130)
5400000100009690001
5400000100009690002
(97-999),(132-998)
5400000100009690003
(1-65),(8-70)
5400000100009710001
(67-999),(102-998)
5400000100009710002
5400000100009710003
(72-100)
5400000100009710004
115,(144-154)
5400000100009740001
(1-29),(2-142)
5400000100009740002
630080
(156-190),(31-999)
5400000100009740003
(192-998)
5400000100009740004
5400000100009750001
5400000100009750002
(1-33),(2-10)
5400000100009810001
(35-55),(12-998)
5400000100009810002
5400000100009810003
5400000100009950001
5400000100009950002
(79-999),(106-998)
5400000100009980001
82/2,82/3,(86-104)
5400000100009980002
(1-15),(2-8)
5400000100009980003
(17-77),(10-84)
5400000100009980004
(149-153),(102-110)
5400000100010060001
(39-147),(10-18),(22-100)
5400000100010060002
(112-998),(155-999)
5400000100010060003
(2-8),20,(1-37)
5400000100010060004
5400000100010090001
(43-999),(44-998)
5400000100010090002
(1-53),(2-28)
5400000100010100001
(103-999),(74-998)
5400000100010100002
(55-101),(30-72)
5400000100010100003
5400000100010110001
7/1,(9-999),(2-998)
5400000100010110002
2,(4-12)
5400000100010130001
97/1,(99-147),(72-112)
5400000100010130002
5400000100010130003
(149-999),(114-998)
5400000100010130004
(41-97),(14-70),2,2
5400000100010130005
(1-3),(2-14)
5400000100010140001
(159-305),(150-330)
5400000100010140002
630002
(307-999),(332-998)
5400000100010140003
(5-157),(16-148)
5400000100010140004
(9-11),(10-16)
5400000100010680001
(37-999),(34-998)
5400000100010680002
(1-7),(13-35),(2-8),(18-32)
5400000100010680003
5400000100010840001
(23-999),(12-998)
5400000100010840002
5400000100010920001
(41-93),(40-72)
5400000100010920002
(95-999),(74-998)
5400000100010920003
(1-161),(2-152)
5400000100010950001
(163-259)
5400000100010950002
(1-47),(2-38)
5400000100011120001
(107-999),(72-88),(94-998)
5400000100011120002
(40-70),90,92,(49-105)
5400000100011120003
5400000100011160001
5400000100011160002
(24-998),(21-999)
5400000100011160003
5400000100011160004
(1-71),(2-76)
5400000100011360001
(73-999),(78-998)
5400000100011360002
(35-999),(34-998)
5400000100011380001
(5-33),(6-32)
5400000100011380002
5400000100011380003
5400000100011420001
(1-27),(31-999),(2-998)
5400000100011420002
(1-27),(41-57)
5400000100011580001
(29-39),(36-48)
5400000100011580002
(59-999),(84-998)
5400000100011580003
(2-34),(50-82)
5400000100011580004
(17-999),(12-998)
5400000100011600001
(1-15),(4-10)
5400000100011600002
5400000100011600003
5400000100011710001
(239-999),(196-998)
5400000100011710002
(67-237),(36-194)
5400000100011710003
(1-47),(2-54)
5400000100011730001
(49-999),(56-998)
5400000100011730002
(1-103),(2-114)
5400000100011740001
(105-999),(116-998)
5400000100011740002
5400000100011810001
5400000100011810002
(99-999)
5400000100011880001
5400000100011880002
5400000100011880003
(1-13),(2-30)
5400000100011900001
(15-175),(32-178)
5400000100011900002
(177-329),(180-402)
5400000100011900003
(331-999),(404-998)
5400000100011900004
(1-3),7,(54-104)
5400000100011910001
5,11,13,25
5400000100011910002
(101-999),(106-998)
5400000100011910003
5400000100011910004
5400000100011910005
(1-15),(2-998)
5400000100011930001
(17-41),(47-999)
5400000100011930002
(7-999),(48-96)
5400000100012020001
5400000100012020002
5400000100012020003
(98-998)
5400000100012020004
4,4,(6-50),(7-57)
5400000100012060001
(1-5),(79-999),(52-998)
5400000100012060002
(59-77)
5400000100012060003
(1-13),(2-14)
5400000100012070001
27,29,(31-999),(32-998)
5400000100012070002
(15-25),(16-30)
5400000100012070003
5400000100012140001
5400000100012140002
5400000100012200001
5400000100012200002
57/1,66,(61-999),(78-80)
5400000100012230001
(1-33),(14-42)
5400000100012230002
(35-47),(44-52)
5400000100012230003
(49-59),(54-64),(68-76),(82-998)
5400000100012230004
5400000100012230005
5400000100012260001
(21-999),(22-998)
5400000100012260002
5400000100012370001
(57-999),(58-998)
5400000100012370002
5400000100012440001
5400000100012440002
(67-999)
5400000100012440003
(10-30)
5400000100012440004
5400000100012440005
5400000100012440006
5400000100012630001
5400000100012630002
23,25
5400000100012740001
5400000100012740002
5400000100012740003
27,(31-999)
5400000100012740004
(9-21),(8-20)
5400000100012740005
5400000100012740006
(22-48),(54-998)
5400000100012740007
58/1,(61-999),(60-998)
5400000100012810001
5400000100012810002
(27-59),(42-58)
5400000100012810003
(8-40),(7-25)
5400000100012810004
5400000100012830001
5400000100012830002
5400000100012860001
5400000100012860002
5400000100012880001
(117-183),(106-160)
5400000100012880002
(185-205),(162-202)
5400000100012880003
(31-83)
5400000100012880004
(85-115),(50-104)
5400000100012880005
5400000100012880006
(2-24),(1-17)
5400000100013070001
5400000100013070002
11,13,26,220
5400000100013250001
(1-9),(15-999),(2-24),(28-218)
5400000100013250002
(1-19),(25-999),(2-998)
5400000100013320001
(21-23)
5400000100013320002
(1-9),(2-8)
5400000100013450001
(11-999),(10-998)
5400000100013450002
5400000100013470001
5400000100013470002
5400000100013600001
(73-999),(60-998)
5400000100013600002
5400000100013620001
(223-999),(136-202)
5400000100013620002
(35-143),(34-134)
5400000100013620003
(9-33),(12-32)
5400000100013620004
5400000100013620005
(204-998)
5400000100013620006
5400000100013640001
5400000100013640002
5400000100013640003
(1-235),(2-194)
5400000100013730001
(237-417),(196-350)
5400000100013730002
(419-999),(352-998)
5400000100013730003
(1-999),(2-60)
5400000100013800001
5400000100013800002
5400000100013850001
(28-52)
5400000100013850002
(49-999),(54-998)
5400000100013850003
5400000100013850004
5400000100013960001
(19-39),(44-128)
5400000100013960002
(41-79)
5400000100013960003
5400000100013960004
5400000100013960005
5400000100013960006
201,203,(207-281),(182-240)
5400000100014060001
(1-119),(2-108)
5400000100014060002
(121-199),205,(110-180)
5400000100014060003
(242-254),(283-289)
5400000100014060004
(256-422),(291-433)
5400000100014060005
(424-998),(435-999)
5400000100014060006
(221-363),(222-356),202
5400000100014100002
(365-999),(358-998)
5400000100014100003
5400000100014270001
5400000100014270002
5400000100014330001
(33-999),(26-998)
5400000100014330002
(5-31),(6-24)
5400000100014330003
5400000100014510001
5400000100014510002
(14-16)
5400000100014510003
17/1,17,(19-999)
5400000100014590001
(1-17),(2-998)
5400000100014590002
1,3,2,10,12
5400000100014600001
(5-999),(4-8),(14-998)
5400000100014600002
(1-29),(2-8),(14-20)
5400000100014630001
(31-999),10,12,20,(22-998)
5400000100014630002
(1-9),(2-998)
5400000100014640001
5400000100014640002
5400000100014670001
(23-57)
5400000100014670002
(3-21),(2-10)
5400000100014670003
(59-67),(133-999),(188-998)
5400000100014670004
(69-131),57
5400000100014670005
(12-84)
5400000100014670006
(86-186)
5400000100014670007
5400000100014690001
5400000100014690002
5400000100014770001
5400000100014770002
36/1,36/2,35/1,35/2,(38-76),(37-75)
5400000100014770003
5400000100014800001
(1-7),(11-999),(2-998)
5400000100014800002
5400000100014840001
(41-71),(44-96)
5400000100014840002
(73-999),(98-998)
5400000100014840003
(2-8),(14-16)
5400000100014990001
(1-999),10,12,(18-998)
5400000100014990002
5400000100015000001
(42-998),(51-999)
5400000100015000002
(1-29),(2-6)
5400000100015010001
(31-999),(8-998)
5400000100015010002
(1-999),(26-998),18/2
5400000100015060001
5400000100015060002
(1-195),(2-200)
5400000100015270001
(271-415),(254-370)
5400000100015270002
(417-999),(372-998)
5400000100015270003
(1-41),(2-998)
5400000100015280001
5400000100015280002
5400000100015310001
70/1,72,74,76
5400000100015310002
(1-43),(2-18)
5400000100015500001
(45-999),(20-998)
5400000100015500002
5400000100015660001
5400000100015660002
5400000100015700001
(39-127),(40-998)
5400000100015700002
5400000100015700003
(1-29),(2-86)
5400000100015710001
(31-999),(88-998)
5400000100015710002
(1-221),(2-202)
5400000100015780001
630029
(223-999),(204-998)
5400000100015780002
630036
5400000100015790001
(11-999),(24-998)
5400000100015790002
(1-33),(2-54)
5400000100015850001
(56-998),(35-999)
5400000100015850002
5400000100016090001
(19-999),(14-998)
5400000100016090002
5400000100016090003
5400000100016150001
(81-999),(72-998)
5400000100016150002
5400000100016230001
5400000100016230002
(1-45),(2-130)
5400000100016300001
(47-999),(132-998)
5400000100016300002
5400000100016320001
(41-83),(42-92)
5400000100016320002
5400000100016320003
5400000100016430001
(101-221),(98-230)
5400000100016430002
(223-999),(232-998)
5400000100016430003
5400000100016590001
5400000100016590002
5400000100016590003
5400000100017240001
(44-92)
5400000100017240002
5400000100017410001
5400000100017410002
181
5400000100017810001
(247-255),246,254
5400000100017810002
(1-49),(59-999),(2-998)
5400000100400150001
630900
5400000100400150002
630901
5400000100400290001
5400000100400290002
630095
5400000200000020001
633003
5445
50408000000
(29-999),(16-998)
5400000200000020002
5400000200000040001
633011
(31-999),(32-998)
5400000200000040002
633010
(1-81),(2-18)
5400000200000110001
(83-999),(20-998)
5400000200000110002
633009
5400000200000180001
633004
(1-999),(2-52),(56-998)
5400000200000180002
5400000200000230001
5400000200000230002
5400000200000250001
(43-999),(60-998)
5400000200000250002
5400000200000320001
(59-999),(60-998)
5400000200000320002
5400000200000490001
(7-999),(24-998)
5400000200000490002
(1-49),95,(2-92)
5400000200000560001
(102-998),(103-999)
5400000200000560002
5400000200000610001
5400000200000610002
5400000200000660001
(31-89),(20-96)
5400000200000660002
(91-999),(98-998)
5400000200000660003
5400000200000670001
(19-999),(18-998)
5400000200000670002
5400000200000710001
(21-999),(24-998)
5400000200000710002
(1-81),(2-86)
5400000200000720001
(83-999),(88-998)
5400000200000720002
5400000200000750001
(15-49),(20-54)
5400000200000750002
(51-999),(56-998)
5400000200000750003
(1-71),(2-72)
5400000200000760001
(73-999),(74-998)
5400000200000760002
5400000200000790001
(59-141),(60-144)
5400000200000790002
(143-999),(146-998)
5400000200000790003
(1-47),(51-53),61,(69-999)
5400000200000820001
(2-46),(50-52),(60-998)
5400000200000820002
48,49,54,55,56,57,58,59,63,64,65,67
5400000200000820003
5400000200000920001
5400000200000920002
5400000200001010001
(35-77),(32-122)
5400000200001010002
(124-998),(79-999)
5400000200001010004
5400000200001080001
(1-35),(24-50)
5400000200001080002
5400000200001080003
5400000200001190001
(45-123),(44-124)
5400000200001190002
(125-999),(126-998)
5400000200001190003
(1-21),(51-999),(2-998)
5400000200001280001
(23-49)
5400000200001280002
5400000200001400001
(1-7),(15-999),(2-998)
5400000200001400002
5400000200001430001
5400000200001430002
(43-999),(34-998)
5400000200001430003
5400000200001490001
5400000200001490002
(1-25),(2-62)
5400000200001510001
(27-999),(64-998)
5400000200001510002
5400000200001520001
(67-999),(36-998)
5400000200001520002
5400000200001560001
(13-999),(26-998)
5400000200001560002
5400000200001630001
5400000200001630002
(1-57),(2-42)
5400000200001650001
(59-999),(44-998)
5400000200001650002
(1-3),(7-999)
5400000600000130001
632383
5471
5452
50415000000
5,(4-998)
5400000600000130002
632385
5400000600000140001
5400000600000140002
(1-11),(2-10)
5400000600000150001
632083
(13-999),(12-998)
5400000600000150002
632080
5400000600000160001
5400000600000160002
5400000600000170001
5400000600000170002
(13-999)
5400000600000350001
5400000600000350002
632382
(1-39),(2-56),58 
5400000600000560001
632387
(41-999),(58-998)
5400000600000560002
(1-19),(12-998),6 
5400000600000600001
21,23
5400000600000600002
5400000600000750001
(2-60),(1-39)
5400000600000750002
5400000600000890001
5400000600000890002
5400400100000120001
633340
5461
5413
50206501000
5400400100000120002
633343
(2-58),(1-87)
5401800000100060001
633564
5462
5431
50236551000
(60-72),(89-999)
5401800000100060002
633561
5401800000100090001
(28-998),(29-999)
5401800000100090002
633562
(1-73),(12-86)
5401800000100550001
(75-151),(88-146)
5401800000100550002
5401800000100570001
(121-173),(126-188)
5401800000100570002
633563
(1-43),(2-78)
5401800000100590001
(45-61),(80-104)
5401800000100590002
5401800000100600001
(59-89),66,(68-98)
5401800000100600002
(1-53),(2-86)
5401800000100750001
(55-123),(88-172)
5401800000100750002
5402200000100390001
633621
5436
50248551000
(77-167),(90-206)
5402200000100390002
633623
(1-89),(2-162),174,176
5402200000100560001
(91-999),(164-172)
5402200000100560002
5402200000100680001
(53-123),(82-194)
5402200000100680002
5402200000100850001
(17-77),(10-74)
5402200000100850002
5402200000100860001
(55-167),(56-174)
5402200000100860002
(51-999),(54-998)
5402800100000010001
633522
5440
50257501000
(2-52),(1-49)
5402800100000010002
633525
(2-84),(1-35)
5402800100000260001
(86-998),(37-999)
5402800100000260002
5402800100000360001
5402800100000360002
5402800100000430001
(115-999),(126-998)
5402800100000430002
5402800100000470001
5402800100000470002
(1-5),33,35
5402800100000600001
(7-31),(2-998),(37-999)
5402800100000600002
(71-999),(52-998)
5402800100000640002
5402800100000790001
5402800100000790002
(1-107),(2-122)
5402800100000830001
(109-999),(124-998)
5402800100000830002
(1-29),(2-32)
5402800100000880001
(31-999),(34-998)
5402800100000880002
5500000100000060001
644031
5504
52401382000
(2-36),(21-41)
5500000100000060002
644009
(51-53),(61-65),(69-89)
5500000100000070001
644105
5503
5500000100000070002
644052
5500000100000100001
644015
5507
52401364000
27-146,152
5500000100000100002
644103
5500000100000110001
6-94
5500000100000110002
5500000100000250001
2,(6-68),(1-117)
5500000100000250002
644116
(3-65)
5500000100000300001
(20-28)
5500000100000300002
644086
5500000100000350001
5500000100000350002
(14-32),(5-33)
5500000100000360001
(2-12),(1-3)
5500000100000360002
5500000100000360003
644013
(18-38),5
5500000100000490001
644077
5501
52401380000
(2-16),3,3ª1,(7-13)
5500000100000490002
644029
(25-37)
5500000100000500001
(39-73)
5500000100000500002
(13-17)
5500000100000500003
5500000100000520001
644088
(22-38),(19-31)
5500000100000520002
644065
(40-46),(35-43)
5500000100000520003
644053
(48-80),33,33ª1,(51-59)
5500000100000520004
644089
(136-224),(133-223),277
5500000100000560001
644047
(58-134),(69-131)
5500000100000560002
644007
2-4,6
5500000100000560003
644122
(8-56),(5-67)
5500000100000560004
(2-56),(1-91)
5500000100000570001
644070
(58-110),(93-179)
5500000100000570002
1,(5-9)
5500000100000580001
(2-14),(18-30)
5500000100000580002
(32-40),(11-57)
5500000100000580003
1-12,(16-38)
5500000100000630001
(40-94),(15-29)
5500000100000630002
(2-88),(5-39)
5500000100000860001
(90-140),(49-101)
5500000100000860002
22,22ª1,94,(81-103)
5500000100000880001
(6-12),(3-13),(53-79)
5500000100000880002
10,(7-11)
5500000100000910001
644090
(2-8),(1-5)
5500000100000910002
644110
(2-26),(38-40)
5500000100000920001
644058
5505
52401372000
(28-32),(1-49)
5500000100000920002
644120
(16-20),(11-19)
5500000100001010001
644083
(2-14),(1-9)
5500000100001010002
644100
5500000100001070001
(12-16),(28-58),(3-5),(17-41)
5500000100001070002
5500000100001160001
644023
5506
52401376000
(6-14)
5500000100001160002
644041
(146-160),(211-247)
5500000100001210001
644001
(162-238),(249-285)
5500000100001210002
644021
(2-46),(1-101)
5500000100001210004
4,8-19
5500000100001260001
33,37-48
5500000100001260002
6,(15-19),39
5500000100001270001
(40-58),(64-76),(41-49),(53-73)
5500000100001270002
5500000100001280001
644006
2,2,1,3,7
5500000100001380001
644046
32,34-55
5500000100001380002
(4-30),(9-33)
5500000100001380003
(162-188),(159-165)
5500000100001460001
644069
(190-244),(167-249)
5500000100001460002
644034
(86-160),(73-157)
5500000100001460003
644033
(2-84),(1-71)
5500000100001460004
5500000100001470001
644022
5500000100001470002
644092
5500000100001470003
644074
5500000100001500001
644060
(32-34),3,(31-77)
5500000100001500002
644030
5500000100001580001
644014
2ª1,(30-94),(33-83)
5500000100001580002
644039
(2-20),5,5ª1,67
5500000100001600001
(24-36),87
5500000100001600002
644106
5500000100001610001
(2-12),(21-29),9
5500000100001610002
(2-84),(1-65)
5500000100001640001
(86-154),(67-103)
5500000100001640002
88,90,(55-999)
5500000100001670001
5500000100001670002
5500000100001670003
(74-86),(92-998)
5500000100001670004
5500000100001680001
(62-186),(67-115)
5500000100001680002
5500000100001750001
6,(14-22)
5500000100001750002
(125-197)
5500000100002020001
(148-230),197,(199-243)
5500000100002020002
5500000100002020003
644043
(232-998),(245-999)
5500000100002020004
(2-146),(25-123)
5500000100002020005
5500000100002050001
644005
(78-86),(81-111)
5500000100002050002
(88-120),(113-163)
5500000100002050003
(64-88),(69-89)
5500000100002060001
(28-62),(33-67)
5500000100002060002
(2-34),(1-39)
5500000100002080001
(36-72),(41-71)
5500000100002080002
644091
(2-50),(1-37)
5500000100002110001
644082
(52-56),(39-43)
5500000100002110002
644016
(24-56),(19-61)
5500000100002180001
(58-136),(63-139)
5500000100002180002
(16-22),(11-13)
5500000100002300001
(4-12),7,9
5500000100002300002
(51-69)
5500000100002320001
(2-74),(1-37)
5500000100002320002
2,(1-11)
5500000100002340001
(4-64),(13-81)
5500000100002340002
(66-112),(83-123)
5500000100002340003
(2-10),(1-13)
5500000100002380001
15,24
5500000100002380002
(10-244),(21-139)
5500000100002410001
5500000100002410002
(10-42),(21-55)
5500000100002420001
5500000100002420002
(12-46),(15-27)
5500000100002430001
(11-13)
5500000100002430002
(106-116),(121-999),178
5500000100002440002
(50-96),(25-33),(39-87)
5500000100002440003
644024
(98-104),(128-130),(89-119)
5500000100002440004
644010
(2-56),(1-73)
5500000100002470001
(58-118),(75-125)
5500000100002470002
(2-62),(1-7)
5500000100002570001
(64-152),(15-107)
5500000100002570002
(1-23),14,14,14
5500000100002650001
(16-32),(25-39)
5500000100002650002
644073
5500000100002650003
644081
5500000100002690001
644123
(8-10),(7-19),18,20
5500000100002690002
(20-84),(1-81)
5500000100002760001
(86-160),(83-117)
5500000100002760002
(10-14),(30-44),(17-25),(33-47)
5500000100003080001
(46-66),(49-67)
5500000100003080002
(12-36),42,(1-5)
5500000100003130001
40,40ª1,(44-100),(7-55)
5500000100003130002
644079
5500000100003230001
5500000100003230002
5500000100003350001
9,(11-17)
5500000100003350002
(2-6),(10-28)
5500000100003350003
5500000100003350004
(128-192),(121-209)
5500000100003720001
(2-60),(1-23)
5500000100003720002
(62-126),(25-119)
5500000100003720003
23-27
5500000100003730001
644032
5500000100003730002
1,2,5,5,5,6,9-12
5500000100003840001
644027
3,4,4,4,4,7
5500000100003840002
644018
5500000100003860001
20-129
5500000100003860002
1-3,(11-25)
5500000100003910001
(12-14),(27-35)
5500000100003910002
(2-94),(1-85)
5500000100003920001
(96-999),(87-999)
5500000100003920002
5500000100003930001
5500000100003930002
5500000100003940001
644042
30-42
5500000100003940002
644048
43-49
5500000100003940003
644020
5500000100003940004
1-17,40
5500000100004020001
(36-54),(45-51)
5500000100004020002
644117
5500000100004030001
(2-44),(1-39)
5500000100004030002
5500000100004170001
(62-68),(1-29)
5500000100004170002
5500000100004250001
(2-24),(28-56)
5500000100004250003
(222-998),(125-999)
5500000100004250004
(96-220),(77-123)
5500000100004250005
(24-28),(114-204),(101-181)
5500000100004310001
(4-22),(30-112),(3-9),(47-91)
5500000100004310002
5500000100004340001
100-125
5500000100004340002
644036
(102-174),(89-139)
5500000100004370001
(2-100),(1-87)
5500000100004370002
(106-176),(97-173)
5500000100004380001
(6-104),(1-95)
5500000100004380002
(2-78),(1-81)
5500000100004390001
(80-150),(83-155)
5500000100004390002
5500000100004400001
(68-90),(69-135)
5500000100004400002
22,(49-63)
5500000100004410001
(2-12),(1-47)
5500000100004410002
5500000100004630001
5500000100004630002
5500000100004710001
5500000100004710002
644112
5500000100004710003
644119
22,(15-31)
5500000100004710004
5500000100004850001
(2-64),(21-99)
5500000100004850002
5500000100004870001
7-70
5500000100004870002
(18-72),(15-71)
5500000100004880001
(2-16),(7-13)
5500000100004880002
(12-18)
5500000100004970001
(20-38),(25-37)
5500000100004970002
5500000100005020001
5500000100005020002
644045
(18-32),(15-33)
5500000100005020003
644012
34,46
5500000100005020004
(2-24),(1-63)
5500000100005070001
(26-32),52,56
5500000100005070002
644076
(65-71),(75-105),109,111
5500000100005070003
5500000100005080001
(2-12),7,11,13
5500000100005080002
644121
(85-89)
5500000100005110001
(2-94),(3-83),100
5500000100005110002
(14-76),(11-67)
5500000100005180001
(2-12),(1-9)
5500000100005180002
(2-62),(1-49)
5500000100005320001
(70-156),(59-153)
5500000100005320002
1-3,(7-17)
5500000100005330001
(4-86),(19-71)
5500000100005330002
5500000100005350001
(12-86),(11-75)
5500000100005350002
(6-10),9
5500000100005390001
(12-58),(15-61)
5500000100005390002
(60-100),(63-91)
5500000100005390003
14,103,107,119
5500000100005400001
(2-12),(1-27)
5500000100005400002
(29-45)
5500000100005400003
(24-80),(87-101),105,(109-159)
5500000100005400004
644035
19,21,(31-97),(101-105),350,477
5500000100005420001
99,99ª1,(125-187)
5500000100005420002
(2-110),107,172
5500000100005420003
163,163
5500000100005430001
644008
(2-28),(7-81),3
5500000100005430002
36,42,(83-103)
5500000100005430003
(70-998),(105-999)
5500000100005430004
(2-52),(19-79)
5500000100005440001
(54-74),(81-101),103
5500000100005440002
(76-154),(103-201)
5500000100005440003
5500000100005520001
5500000100005520002
(119-999)
5500000100005670001
(61-79)
5500000100005670002
(81-117)
5500000100005670003
(136-999)
5500000100005670004
54,(78-130)
5500000100005670005
(132-134)
5500000100005670006
(4-62),(1-79)
5500000100005690001
(64-70),(81-105)
5500000100005690002
5500000100005850001
(4-38),(21-37),155
5500000100005850002
(40-54),(47-57)
5500000100005850003
5500000100005970001
(20-26),(23-27)
5500000100005970002
(28-50),(31-53)
5500000100005970003
(154-218),(133-181)
5500000100006140002
(2-78),(1-49)
5500000100006140003
(80-152),(93-131)
5500000100006140004
(182-999),(127-185),195,(197-999)
5500000100006330001
(138-180),(187-195)
5500000100006330002
(2-42),(1-79)
5500000100006330004
(98-136)
5500000100006330006
1,(11-15),23,25ª6
5500000100006360001
(4-38),(3-9)
5500000100006360002
(69-87),(91-99)
5500000100006370001
(118-132),(101-119)
5500000100006370002
4,(12-72),(21-53)
5500000100006370003
(74-110),(55-67)
5500000100006370004
10,(154-182)
5500000100006380001
5500000100006380002
(49-303)
5500000100006380003
(184-210),218,222,(234-264)
5500000100006380004
2,(138-152)
5500000100006380005
(266-272),(298-304)
5500000100006380006
1,3,7
5500000100006400001
2,(8-998),3,21,23
5500000100006400002
(181-185)
5500000100006420001
(104-210),(63-179)
5500000100006420002
(6-64),(1-23)
5500000100006430001
(66-184),(37-95)
5500000100006430003
(65-163)
5500000100006440001
(2-16),(1-41),40
5500000100006440002
(52-112)
5500000100006440003
5500000100006450001
(70-164),(77-185)
5500000100006450002
(188-190)
5500000100006460001
(2-50),(1-41)
5500000100006460002
(52-186),(49-175)
5500000100006460003
5500000100006470001
(74-170),(95-175)
5500000100006470002
(118-224),(125-199)
5500000100006480001
(2-98),(1-105)
5500000100006480002
(2-72),(1-109)
5500000100006490001
(94-182),(111-229)
5500000100006490002
66,(59-69)
5500000100006500002
(52-64),(68-92),(71-103)
5500000100006500003
(94-142),(105-199)
5500000100006500004
208,210,(167-175)
5500000100006510001
(2-92),(1-25),(47-61)
5500000100006510002
(94-114),(132-160)
5500000100006510003
(63-165)
5500000100006510004
(112-236),(147-209)
5500000100006520001
(2-16),(1-71),18,18,177
5500000100006520002
(2-58),(1-47),77
5500000100006530001
(78-96),(81-217)
5500000100006530002
5500000100006540001
(2-36),(1-23)
5500000100006540002
(2-40),(1-59)
5500000100006550002
(92-142),(99-157)
5500000100006550003
(2-72),(1-39)
5500000100006560002
(74-114),(41-59)
5500000100006560003
(4-18),28,(3-37)
5500000100006580001
5500000100006580002
73,85
5500000100006590001
10,(118-244),(121-207)
5500000100006590002
18,79
5500000100006600001
(81-93)
5500000100006600002
(110-116),(111-135)
5500000100006600003
109
5500000100006600004
(154-234),(157-173),(177-223)
5500000100006600005
(236-252),175,(225-245)
5500000100006600006
(106-110),(113-115)
5500000100006610001
(112-146),(119-153)
5500000100006610002
(154-234),17,(155-219)
5500000100006610003
104,11,111,117,117
5500000100006610004
(244-252),(221-231),198/47,198/48
5500000100006610005
80
5500000100006620001
(87-109)
5500000100006620002
(116-164)
5500000100006620003
73,(68-70),76
5500000100006620004
(78-96)
5500000100006620005
34,(168-188),(111-193)
5500000100006620006
(93-109)
5500000100006630001
(102-122),(111-147)
5500000100006630002
(124-190),(149-227)
5500000100006630003
(2-20),17
5500000100006630004
(128-198),(131-219),281
5500000100006640001
(80-118),(77-95)
5500000100006640003
(120-126),(97-129)
5500000100006640004
(126-162),(125-141)
5500000100006650001
(164-232),(151-179)
5500000100006650002
(90-106),(105-123)
5500000100006650004
(1-5),(9-25),29,33
5500000100006670001
644113
5500000100006670002
644109
(2-18),1,1
5500000100006680001
(20-48),(1-19),(23-29)
5500000100006680002
5500000100006740001
(11-21)
5500000100006740002
5500000100006740003
5500000100006740004
5500000100006740005
5500000100006820001
5500000100006820002
644050
5500000100006820003
2,6,(10-18),(22-30)
5500000100006820004
5500000100006820005
(48-60),(66-72),(53-67)
5500000100006820006
(74-82),81
5500000100006820007
5500000100006850001
2,(46-998),(39-999)
5500000100006850002
12ª1,14,14ª1
5500000100006870001
(1-15),(23-999)
5500000100006870002
(4-16),(17-21)
5500000100006870003
10,(13-17)
5500000100006880001
5500000100006880002
(14-36),(1-25)
5500000100006910001
5500000100006910002
4,(1-5)
5500000100006920001
6-12
5500000100006920002
5500000100006940001
(7-15),23
5500000100006940002
5500000100006940003
(18-36),(35-43)
5500000100006980001
(2-4),(1-11)
5500000100006980002
(38-58),60
5500000100006980003
(6-16),(13-17),(29-33)
5500000100006980004
(60-84),(73-91)
5500000100006980005
(9-11)
5500000100007000001
5500000100007000002
(136-998),(105-999)
5500000100007010001
(2-72),(1-93)
5500000100007010002
(74-134),72ª1,(95-103),139
5500000100007010003
5500000100007030001
(40-56),(39-43),(47-59)
5500000100007030002
(2-62),(3-59)
5500000100007050001
(64-96),(61-95)
5500000100007050002
(2-68),(1-65)
5500000100007060001
(70-94),(67-91)
5500000100007060002
1-75
5500000100007070001
(76-106),(77-103)
5500000100007070002
(2-4),(8-86),(1-69),(73-83)
5500000100007080001
(88-130),(85-121)
5500000100007080002
(6-94),(1-91)
5500000100007090001
(96-122),(93-119)
5500000100007090002
(104-132),(95-125)
5500000100007100001
(4-102),1,(5-93)
5500000100007100002
(2-78),(3-107)
5500000100007110001
(80-112),(109-143)
5500000100007110002
(2-60),(1-77)
5500000100007120001
(62-96),(79-111)
5500000100007120002
5500000100007140001
(60-92),(55-95)
5500000100007140002
5500000100007150001
(58-74),(59-85)
5500000100007150002
(2-8),(44-58),(3-55)
5500000100007160001
(60-82),(57-71)
5500000100007160002
5500000100007240001
(26-54),51
5500000100007240002
(233-241)
5500000100007250001
(74-82),(41-45),(133-171)
5500000100007250002
(2-28),(60-64),(1-15)
5500000100007250003
(66-72),(17-25),96,(125-131)
5500000100007250004
(140-152),(173-231)
5500000100007250005
5500000100007260001
5500000100007260002
(12-74),(9-67)
5500000100007310001
(2-10),(5-7)
5500000100007310002
(78-100),73,73ª1,73ª2
5500000100007310003
(2-48),(1-33)
5500000100007330001
(50-102),(35-99)
5500000100007330002
5500000100007340001
1,(9-27),(37-49),65
5500000100007340002
(67-87)
5500000100007340003
85,(89-101)
5500000100007340004
(4-6),(14-50)
5500000100007340005
(64-74)
5500000100007340006
(76-86),96,100
5500000100007340007
(2-56),(1-65)
5500000100007350001
(58-124),(130-134),(67-133),145
5500000100007350002
5500000100007360001
5500000100007360002
(24-38),(23-45)
5500000100007360003
1,1,1ª1,2,2,2ª1,2ª1,2
5500000100007390001
(112-114),(117-195),162
5500000100007390002
644085
(4-26),(3-7)
5500000100007390003
644080
(48-66),(21-45)
5500000100007390004
(68-78)
5500000100007390005
(82-88),(47-67)
5500000100007390006
(90-110),(69-73)
5500000100007390007
(2-32),(1-15)
5500000100007540001
(34-72),(17-137)
5500000100007540002
5500000100007620001
(31-127)
5500000100007620002
(32-130)
5500000100007620003
5500000100007650001
(48-56),(45-55)
5500000100007650002
1,6,7
5500000100007670001
2,2,4
5500000100007670002
5500000100007680001
1,(2-16),(5-11)
5500000100007680002
(4-22),(9-25)
5500000100007730001
(24-112),(27-91)
5500000100007730002
65,67,68
5500000100007780001
2-6,(10-44),50,(15-63)
5500000100007780002
(2-20),(1-5)
5500000100007850001
(22-28),(7-45)
5500000100007850002
28ª1,(30-54),(47-49),(59-999)
5500000100007850003
5500000100007980001
(48-104),(47-113)
5500000100007980002
(130-170),(111-175)
5500000100008110001
(44-104),(45-109)
5500000100008110002
(14-58),(11-69)
5500000100008170001
70-110
5500000100008170002
(2-8),(3-5),(13-61)
5500000100008180001
(14-58),(73-93)
5500000100008180002
3,9,11,33
5500000100008310001
(96-218),(85-287)
5500000100008310002
(126-999),(143-999)
5500000100008390001
(24-124),(31-141)
5500000100008390002
5500000100008390003
(144-214),(125-197)
5500000100008410001
5500000100008410002
(216-266),(199-237)
5500000100008410003
(268-282),(239-287)
5500000100008410004
(26-142),(15-85)
5500000100008410005
(187-219)
5500000100008430001
(172-216),(157-185)
5500000100008430002
(2-88),(21-79)
5500000100008430003
(218-294)
5500000100008430004
(90-170),(81-155)
5500000100008430005
5500000100008650001
(4-14),(1-5),17
5500000100008650002
5500000100008710001
(18-38),(35-37)
5500000100008710002
(1-5),(15-21),(2-16)
5500000100008710003
(20-40),(19-29),(35-45)
5500000100008720001
(42-54),(47-51)
5500000100008720002
(56-64),(53-57)
5500000100008720003
5500000100008720004
(2-50),(1-19)
5500000100008730001
(52-102),(21-49)
5500000100008730002
(5-11),23,29,35,(12-44)
5500000100008790001
(46-60),(37-49)
5500000100008790002
3,3ª1,3ª2,3ª3,(7-9)
5500000100008800001
5500000100008800002
(2-8),1,1ª1,1ª2,5,5,5ª1,5ª1,5ª2
5500000100008800003
(14-60)
5500000100008980001
(62-84),(39-49),59
5500000100008980002
(90-100),(61-75)
5500000100008980003
5500000100009020001
5500000100009020002
(45-49)
5500000100009030001
(2-10),(1-29)
5500000100009030002
(2-26),(1-39)
5500000100009050001
(28-216),(41-175)
5500000100009050002
5500000100009170001
31-77
5500000100009170002
9-21,60,61
5500000100009320001
(62-68),(76-86),(63-87)
5500000100009320002
(88-104),(97-111)
5500000100009320003
7-147
5500000100009350001
1,6,148-999
5500000100009350002
5500000100009670001
17-75
5500000100009670002
1,(23-53),(100-104)
5500000100009680001
5500000100009680002
(4-10),(3-19)
5500000100009690001
(129-193)
5500000100009690002
(12-60),(21-127)
5500000100009690003
(2-18),(1-11),(15-19)
5500000100009700001
(120-188),(103-149)
5500000100009700002
(20-116),(21-101)
5500000100009700003
5500000100009710001
(20-94),(15-105)
5500000100009710002
(96-154),(107-169)
5500000100009710003
5500000100009720001
(112-174),(101-147)
5500000100009720002
(18-110),(19-97)
5500000100009720003
(196-234),(183-205)
5500000100009730001
(4-38),(1-29)
5500000100009730002
(42-190),(35-179)
5500000100009730003
(12-58),(5-55)
5500000100009740001
(2-10),3,3
5500000100009740002
(120-140),(103-137)
5500000100009790001
(2-66),(7-17),(27-59)
5500000100009790002
(74-112),(63-101)
5500000100009790003
3,5,(8-24),(64-86),(59-99)
5500000100009910001
88,90
5500000100009910002
102,102
5500000100009910003
110,(91-101)
5500000100009930001
(22-34),(44-128),(1-89),119
5500000100009930002
(2-80),(1-123)
5500000100009950001
(84-90),(127-129)
5500000100009950002
(2-58),(64-80),(1-123),166
5500000100010020001
(82-96),110,125,125ª1
5500000100010020002
(37-41)
5500000100010290001
(2-44),(1-35)
5500000100010290002
(46-88),(43-79)
5500000100010290003
(12-56),(3-25)
5500000100010640001
(60-82),(41-47)
5500000100010640002
(18-20),(28-32)
5500000100010690001
5500000100010690002
75,(81-85)
5500000100010710001
(4-40),(1-73)
5500000100010710002
(158-170),(147-159)
5500000100010850001
(172-208),(161-199)
5500000100010850002
(2-92),(1-83)
5500000100010850003
(94-156),(85-145)
5500000100010850004
(2-72),(1-111)
5500000100011140001
(96-148),(145-217)
5500000100011140002
(120-212),(143-213)
5500000100011150001
(30-36),54,15,(43-47)
5500000100011150002
5500000100011190001
(12-54),(13-49)
5500000100011190002
(56-90),(51-97)
5500000100011190003
(146-184),(135-189)
5500000100011200001
(2-144),(1-133)
5500000100011200002
(132-178),(129-179)
5500000100011210001
2-128,130
5500000100011210002
(132-178),(143-189)
5500000100011220001
(2-130),(1-141)
5500000100011220002
(150-184),(135-175)
5500000100011230001
(2-148),(1-133)
5500000100011230002
(130-156),151
5500000100011240001
(2-128),(1-135)
5500000100011240002
(134-152),(141-157)
5500000100011250001
(2-132),(1-139)
5500000100011250002
(132-144),150,150ª1,(123-157)
5500000100011260001
(2-130),(1-121)
5500000100011260002
(1-99)
5500000100011270001
5500000100011270002
5500000100011280001
(10-106),(11-93)
5500000100011280002
(12-84),(17-119)
5500000100011290001
(2-10),(1-15)
5500000100011290002
5500000100011300001
13-55
5500000100011300002
(56-104),(57-117)
5500000100011300003
(4-16),(1-13),17,25
5500000100011310001
(18-108),(19-137)
5500000100011310002
(2-20),(1-23)
5500000100011320001
(22-158),(27-165),187
5500000100011320002
(2-66),(1-77)
5500000100011330001
(70-146),(79-173)
5500000100011330002
5500000100011340001
(98-172),(87-169),173
5500000100011340002
1-92
5500000100011350001
(188-196),202,(95-159)
5500000100011350002
198,200,202,(204-218),(161-175)
5500000100011350003
(94-172),93,93
5500000100011350004
(2-82),(1-95)
5500000100011360001
(86-104),(97-123)
5500000100011360002
(2-86),(3-37)
5500000100011370001
(88-106),41,43
5500000100011370002
(2-26),(1-29)
5500000100011380002
(28-50),(31-81)
5500000100011380003
(52-98),(85-123)
5500000100011380004
(2-30),(1-33),(83-89)
5500000100011390001
(32-52),(35-57),65
5500000100011390002
(2-30),(1-33)
5500000100011400001
(32-56),(35-59)
5500000100011400002
(12-52),(7-81)
5500000100011410001
(2-10),(1-5)
5500000100011410002
(54-136),(83-177)
5500000100011410003
(126-146),(121-143)
5500000100011420001
5500000100011420002
(38-124),(35-119)
5500000100011420003
5500000100011430001
(30-52),(35-57)
5500000100011430002
5500000100011440001
(32-56),(25-49)
5500000100011440002
(2-96),(1-93)
5500000100011450001
(122-146),95,95ª1,(121-157)
5500000100011450002
(1-7),11,(106-118)
5500000100011480001
96,122,(15-27)
5500000100011480002
5500000100011490001
(17-39)
5500000100011490002
(14-100)
5500000100011490003
5500000100011490004
(102-174),(41-175)
5500000100011490005
5500000100011500001
197,197,198-999
5500000100011500002
(8-74),(3-89)
5500000100011500003
(76-196),(91-195),197ª1,197ª2
5500000100011500004
(2-106),(11-101)
5500000100011510001
5500000100011510002
(108-202),(103-225)
5500000100011510003
(9-47)
5500000100011520001
5500000100011520002
(124-998),(103-999)
5500000100011520003
(188-244),(179-227)
5500000100011530001
(2-186),(17-177)
5500000100011530002
5500000100011530003
(156-200),(149-185)
5500000100011540001
(2-154),(1-145)
5500000100011540002
(2-54),(1-43)
5500000100011580001
(56-122),(45-69)
5500000100011580002
5500000100011600001
(66-114),(65-109)
5500000100011600002
5500000100011610001
(40-54),(37-55)
5500000100011610002
(18-58),(3-59)
5500000100011630001
60-139
5500000100011630002
(18-74),(13-79)
5500000100011760001
5500000100011760002
(6-14),(18-20),5,5ª1,15
5500000100011810001
1,(2-4),6
5500000100011810002
(2-32),1,7,9
5500000100011870001
5500000100011870002
(16-82),(13-91)
5500000100011970001
(184-204),(181-233)
5500000100011970002
(100-182),(93-179)
5500000100011970003
29,62,64,164,170,204,204,208
5500000100011980001
(2-60),(9-25),31,(87-101),124,163
5500000100011980002
5500000100012110001
(52-62),(41-53),70,74
5500000100012110002
(138-154),(109-163)
5500000100012130002
(2-34),(1-45)
5500000100012130003
(36-108),(47-107)
5500000100012130004
(110-136)
5500000100012130005
2,(1-39),77
5500000100012220001
(2-110),(41-161)
5500000100012220002
9-15
5500000100012300001
5500000100012300002
220,239
5500000100012310002
(40-68),(78-144),(41-127)
5500000100012310003
(146-178),(129-193)
5500000100012310004
5500000100012330001
(22-58),19,27,(31-49)
5500000100012330002
5500000100012540001
18-69
5500000100012540002
(4-30),(44-78),112,(1-45)
5500000100012560001
(80-104),(47-55),69
5500000100012560002
(100-128),(83-117)
5500000100012610001
(130-238),(119-227)
5500000100012610002
(8-32),(36-48),(52-98)
5500000100012610003
(154-238),(129-197)
5500000100012650001
(2-36),(11-15)
5500000100012650002
(240-272),(199-253)
5500000100012650003
(274-300),(255-267)
5500000100012650004
(38-152),(25-127)
5500000100012650005
(2-4),(1-9)
5500000100012670001
(8-10),11
5500000100012670002
5500000100012940001
(62-158),(67-101)
5500000100012940002
(2-4),8,1,(7-21)
5500000100012980001
3,10,18
5500000100012980002
2,2,(8-14),(1-9),(53-59)
5500000100012990001
(32-44)
5500000100012990002
(50-60),79,83
5500000100012990003
(2-22),(1-15)
5500000100013090001
(24-30),(17-23),55
5500000100013090002
(2-72),(65-81)
5500000100013140001
(3-43)
5500000100013140002
5500000100013300001
11-15,1,3,3,3,5,5,5
5500000100013300002
4,(1-7)
5500000100013370001
5500000100013370002
(2-40),3,(9-29)
5500000100013520001
(42-64),(31-55)
5500000100013520002
(68-154),(59-111)
5500000100013520003
(6-86),(1-29),37,(43-83)
5500000100013590001
(152-192),(155-157)
5500000100013590002
202,185,(189-199),205,205
5500000100013590003
90,98,100,(126-150),(97-139)
5500000100013590004
(117-155)
5500000100013780001
(39-93)
5500000100013780002
2,(36-94),(3-11),(15-25),101
5500000100013790001
(96-178),27,(127-187)
5500000100013790002
5500000100013810001
(43-67),71
5500000100013810002
(14-24),12ª1,12ª2
5500000100013810003
(2-12),(11-31)
5500000100013810004
5500000100013810005
(40-60)
5500000100013810006
5500000100013860001
(6-48),(1-37)
5500000100013860002
(20-24),(19-21)
5500000100013870001
5500000100013870002
5500000100013880001
(18-20),(19-23)
5500000100013880002
5500000100013890001
(2-6),(7-11)
5500000100013890002
(3-33)
5500000100013900001
5500000100013900002
5500000100013900003
(2-98),106,(5-83)
5500000100013970001
(100-104),(108-138),(85-101),7
5500000100013970002
(2-52),(7-13),15ª1
5500000100014020001
5500000100014020002
(88-136),(15-21)
5500000100014020003
3-56
5500000100014050001
58-121
5500000100014050002
(39-119)
5500000100014060001
(2-30),(1-35)
5500000100014060002
5500000100014060003
1,3,5,5
5500000100014090001
(30-54),(9-31)
5500000100014090002
(2-62),(1-71)
5500000100014130001
(66-96),(73-95)
5500000100014130002
(2-26),(1-11),(15-25)
5500000100014140001
5500000100014140002
(30-98),(35-97)
5500000100014140003
(2-30),(1-27)
5500000100014150001
(34-74),(31-37),(49-63)
5500000100014150002
(2-56),(1-51)
5500000100014160001
(78-134),(53-137)
5500000100014160002
(2-44),(1-55)
5500000100014170001
(46-58),(57-77)
5500000100014170002
(2-30),(1-45)
5500000100014180001
(32-98),(49-117)
5500000100014180002
(30-50),(45-59)
5500000100014200001
5500000100014200002
5500000100014210001
(26-42),(17-39)
5500000100014210002
1-19,21
5500000100014220001
(20-42),(23-53)
5500000100014220002
5500000100014230001
(26-42),(23-37)
5500000100014230002
(68-84),17,(21-25),69
5500000100014260002
(2-6),3,7
5500000100014260003
5500000100014310001
(34-76),(65-119)
5500000100014310002
(6-8),(3-9)
5500000100014370001
8ª1,(10-12)
5500000100014370002
5500000100014390001
(164-170),199,199ª1
5500000100014390002
(62-162),(65-197)
5500000100014390004
(13-19)
5500000100014740001
(29-57),(61-69)
5500000100014740002
(2-30),(1-11)
5500000100014740003
(32-70)
5500000100014740004
16,(61-67)
5500000100014750001
2,12,12ª1,16ª1,(43-55)
5500000100014750002
5500000100014750003
10,14,20,(87-133)
5500000100014750004
(104-134),(123-141)
5500000100014790001
(2-98),(1-111)
5500000100014790002
5500000100014870002
(16-56),(31-71)
5500000100060010001
(2-14),(1-7),(13-29)
5500000100060010002
5500000100060810001
644040
(2-998),(1-5),(9-999)
5500000100060810002
5500000101000000001
644094
1-8,10,12-16,18-999
5500000103700000001
9,11,17
5500000103700000002
5500000105200000001
1-85,87-91,93-100,102-151
5500000100062430001
153-189,191-299,301-350
5500000100062430002
357-363,365-388,390-393
5500000100062430003
395-999
5500000100062430004
5500700100000020001
646023
5514
52405000000
5500700100000020002
646020
5500700100000070001
(25-139),(28-138)
5500700100000070002
5500700100000080001
(23-143),(28-144)
5500700100000080002
5500700100000090001
(27-125),(34-124)
5500700100000090002
(1-225),(2-204)
5500700100000180001
646024
(227-253),(206-242)
5500700100000180002
646025
5500700100000190001
5500700100000190002
5500700100000560001
5500700100000560002
5500700100000570001
5500700100000570002
5500700100001160001
5500700100001160002
(1-71),(2-68)
5500700100001190001
(73-999),(70-998)
5500700100001190002
(15-43),(12-54)
5500700100001220001
(45-103),(56-104)
5500700100001220002
(1-43),(2-28)
5500700100001240001
(45-999),(30-998)
5500700100001240002
5500700100001280001
(25-53),(28-58)
5500700100001280002
(1-107),(2-96)
5500700100001320001
(109-213),(98-214)
5500700100001320002
5500700100001380001
(15-97),(30-96)
5500700100001380002
5500700100001500001
5500700100001500002
5500700100001510001
54-66
5500700100001510002
5500800100000010001
646903
5515
52410000000
5500800100000010002
646900
5500800100000020001
5500800100000020002
646902
5500800100000030001
5500800100000030002
5500800100000080001
(33-999),(26-999)
5500800100000080002
(1-45),(2-90)
5500800100000240001
(47-999),(92-999)
5500800100000240002
(1-23),(2-48)
5500800100000260001
(25-999),(50-999)
5500800100000260002
646905
5500800100000280001
(61-999),(70-999)
5500800100000280002
(1-75),(2-70)
5500800100000510001
(77-999),(72-999)
5500800100000510002
(1-999),(2-80)
5500800100000540001
(82-999)
5500800100000540002
5500800100000860001
5500800100000860002
5500800100000900001
5500800100000900002
5500800100000920001
5500800100000920002
5500800100000930001
5500800100000930002
646901
5500800100001010001
(87-999),(112-999)
5500800100001010002
5500800100001130001
646904
5500800100001130002
(60-999)
5500800100001130003
(1-45),(2-10)
5600000100000190001
460000
5610
53401364000
5600000100000190002
5612
53401373000
(1-15),(2-40)
5600000100000200001
460021
(17-29),(42-78)
5600000100000200002
(80-86)
5600000100000200003
460036
(1-65),(2-60)
5600000100000330001
460035
5611
53401368000
5600000100000340001
460006
(65-103),(62-98)
5600000100000340002
(99-135),(94-134)
5600000100000370002
5600000100000430001
(39-53)
5600000100000590002
5600000100000640001
460001
(57-77),(54-78)
5600000100000640002
460024
5600000100000690001
460009
(19-37),(18-22)
5600000100000690002
5600000100000750002
(1-59),(2-64)
5600000100000780001
(1-43),(2-48)
5600000100000810001
(73-81),(76-80)
5600000100000910002
(62-74),71
5600000100000910003
(165-207),(104-130)
5600000100000930002
5600000100001020002
5600000100001050001
(5-67),(6-54)
5600000100001050002
(56-60)
5600000100001050003
(1-77),(2-78)
5600000100001160001
(79-95),(80-94)
5600000100001160002
(1-75),(2-74)
5600000100001180001
(76-78),67
5600000100001180002
(1-69),(2-56)
5600000100001200001
(1-53),(2-58)
5600000100001250001
(1-51),(2-64)
5600000100001320001
5600000100001370001
5600000100001370003
(24-30)
5600000100001390002
5600000100001420001
5600000100001550001
(1-41),(2-22)
5600000100001590001
5600000100001610001
(1-57),(2-26)
5600000100001630001
(61-71),(66-90)
5600000100001630002
(28-64)
5600000100001630004
5600000100001640001
(1-61),(12-76)
5600000100001720001
(63-97),(78-122)
5600000100001720002
(13-15),(12-52)
5600000100001770001
(138-180),(139-181)
5600000100001860001
460048
5609
53401362000
5600000100001930001
(157-247),286
5600000100001980001
(249-273)
5600000100001980002
460050
(3-49),(2-76)
5600000100001980003
(308-314)
5600000100001980005
(91-155)
5600000100001980006
5600000100002000001
(9-15),(12-16)
5600000100002000002
(3-15),(2-24)
5600000100002030001
5600000100002090002
460018
5600000100002120002
5600000100002140001
(17-25),(2-52)
5600000100002140002
5600000100002190001
(55-79),(54-62)
5600000100002190002
(9-53),(10-46)
5600000100002190003
5600000100002280001
(85-139),(92-140)
5600000100002280002
(49-83),(62-90)
5600000100002280003
5600000100002390001
(47-53),(42-64)
5600000100002390002
(61-77),(68-92)
5600000100002390003
(79-109),(94-120)
5600000100002390004
5600000100002430001
(15-39),(16-36)
5600000100002430002
(3-81),(2-70)
5600000100002470002
(85-113)
5600000100002470003
(219-263)
5600000100002540001
(265-287)
5600000100002540002
460028
(130-134)
5600000100002540003
5600000100002600001
5600000100002640001
(33-65),(32-68)
5600000100002640002
(5-29),(6-30)
5600000100002640003
(27-159)
5600000100002660001
5600000100002660002
(138-176)
5600000100002660003
5600000100002680002
1,(2-8)
5600000100002690001
(62-80),(49-77)
5600000100002690002
5600000100002740001
5600000100002780001
(91-145),(36-42)
5600000100002800002
(29-41),(2-24)
5600000100002810001
(43-57),(26-50)
5600000100002810002
5600000100002820001
5600000100002820002
5600000100002850001
(29-55)
5600000100002850002
(7-27),(57-73),(54-94)
5600000100002850003
(16-52)
5600000100002850004
5600000100002850005
(96-116)
5600000100002850006
(1-89),(44-68)
5600000100002890001
2,(6-42)
5600000100002890002
(1-57),(2-18)
5600000100002940001
(21-63)
5600000100003130001
460045
5600000100003210001
(1-9),(11-29),(2-18)
5600000100003210002
460014
5600000100003720001
(55-73)
5600000100004520001
5600000100004520002
(54-74)
5600000100004520003
5600000100007050001
(25-75),(22-76)
5600000100007050002
(1-41),(2-80)
5600000100007100001
(43-75),(82-126)
5600000100007100002
460004
(77-101),(128-160)
5600000100007100003
460003
5600000100007410001
5600000100007410002
5600000100007430001
(31-47),28
5600000100007430002
(1-37),(2-54)
5600000100008290001
(41-87),(56-87)
5600000100008290002
5600000100008340001
(37-45),(28-130)
5600000100008340002
5600000100008390001
5600000100008390002
460002
(23-51),(22-48)
5600000100008390003
(1-87),(2-138)
5600000100008480001
(89-121),(140-192)
5600000100008480002
(1-53),(2-68)
5600000100008620001
(1-73),(1-66)
5600000100008800001
(75-87),(68-70)
5600000100008800002
(5-79),(4-86)
5600000100008830001
(81-121),(88-130)
5600000100008830002
5600000100009450001
(71-95),(18-34)
5600000100009450002
5600000100009450003
(1-47),(2-56)
5600000100009560001
5600000100009560002
5600000100009630001
(47-113)
5600000100009630002
(52-124)
5600000100009630003
5600000100009720001
(39-105),(30-104)
5600000100009720002
(36-76)
5600000100009840001
5600000100009840002
(1-15),(2-4)
5600000100010110001
(21-27),(6-14)
5600000100010110002
5600000100010180001
460056
(9-17),(10-22)
5600000100010180002
460047
(19-41),(24-40)
5600000100010180003
460052
5600000100010190001
460044
29-41
5600000100010190002
460038
(2-20),(1-3)
5600000100010280001
(5-9),(22-32)
5600000100010280002
5600000100010290001
(1-15),(32-62)
5600000100010290002
5600000100010330001
5600000100010330002
(1-15),(4-18)
5600000100010350001
(17-31),(22-34)
5600000100010350002
(1-15),(2-34)
5600000100010490001
5600000100010510001
(17-39),(14-16)
5600000100010510002
5600000100020230001
(3-5),2
5600000100020240002
(7-21),24
5600000100020240003
5600000100020250001
460019
2,(1-13)
5600000300000200001
462363
5607
53420000000
5600000300000200002
462351
(1-55),(8-54)
5600000300000290001
462353
57-150
5600000300000290002
462359
(5-49)
5600000300000320001
462360
(10-24),(53-77),103
5600000300000320002
(82-120)
5600000300000930001
(5-41),(93-125),(2-64)
5600000300000930002
(66-80),(43-75)
5600000300000930003
(122-160)
5600000300000930004
1,1,(4-8)
5600000400000750001
462429
5614
53423000000
(1-33),(10-56),(35-55)
5600000400000750002
462421
5600000400003960001
462435
4-19,2
5600000400003960002
462408
(1-199),(2-36),(86-200),56,58
5600000400004080001
462412
(38-54),(60-80)
5600000400004080002
462432
2-25
5600000400006270001
26-48
5600000400006270002
1-3,4,10
5600000400006450001
5-9,11-30
5600000400006450002
(45-63)
5600000400006840001
1-44,(46-62),64-100
5600000400006840002
462431
5600000400007050001
462403
(24-26)
5600000400007050002
462428
(28-38),88,89
5600000400007050003
462433
40-61,82
5600000400007050004
462411
38-68
5600000400009360001
462430
5600000400009360002
(70-92),(69-93)
5600000400009360003
(129-151)
5600000400009570001
43,45-54
5600000400009570003
(55-127),153
5600000400009570004
(56-118),54 
5600000400009570005
5600000400009720001
53423373000
12-21
5600000400009720002
(1-11),(2-20)
5600000400030990001
(13-97),(22-116)
5600000400030990002
5600000400031080001
5600000400031080002
(44-106),(43-161),(118-150)
5600000400031350001
41,42
5600000400031350005
(15-33),(16-26)
5600000400031350006
462404
5600000400031350008
462419
1-5,7 ,9,13
5600000400031710001
3,5,6-8,10,10,10,12,12,13,(15-19)
5600000400031710002
9,11,(12-18),21-35
5600000400031710003
5600000400031710004
462420
(1-35),(18-46)
5600000400032820001
5600000400032820002
(48-58),(37-49)
5600000400032820004
120-153
5600000400033240001
(17-35)
5600000400033240002
5600000400033240004
(37-59)
5600000400033240005
5600000400033240006
5600000400033240007
5600000400033240008
(86-118),(83-119)
5600000400033240010
10,17,19,21
5600000400033300002
43
5600000400033300004
(23-37),(14-18),41
5600000400033300005
(9-31),(10-26),45-100
5600000400036030005
(28-44),(33-43)
5600000400036030006
462426
(55-59)
5600000400036510002
(1-17),18-30,(32-42),44-54
5600000400036510003
5600000400036510004
30-100
5600000400036630002
1-5,(10-12)
5600000400036810001
(11-25),(18-26)
5600000400036810002
5600000400036990001
(16-36),(15-35)
5600000400036990002
5600000400037320001
(1-14),(1-25)
5600000400037320002
(46-80),(125-157)
5600000400039990003
(82-86),(115-123)
5600000400039990004
5600000400039990005
5600000400046110001
53423368000
5600000400046110002
5600000400051420001
5600000400051420002
21-48,50
5600000400052530002
49,(51-55),(61-76)
5600000400052530003
5600000400052530004
86-99,(56-82)
5600000400052530005
(2-14),15
5600000400052860002
53423364000
5600000400052860003
(16-64),(17-65)
5600000400052860004
5615
32-42
5600000400054060004
5600000400054060005
5600000400054060006
5600000400054210001
(13-91),(24-130)
5600000400054210002
25-33
5600000400069210001
4,6,7,11,13
5600000400069210002
5600000400069300001
(1-35),(2-110)
5600300000300010001
461605
5602
5624
53211802001
(43-119)
5600300000300010002
5600300000300020001
5600300000300030001
5600300000300040001
5600300000300050001
5600300000300060001
5600300000300070001
5600300000300080001
5600300000400010001
461602
53211807002
(1-81),(2-74)
5600300000500020001
461615
53211805001
(1-61),(2-8)
5600300000500030001
5600300000500040001
(1-87),(2-16)
5600300000500050001
(1-83),(2-18)
5600300000600010001
53211802003
(1-77),(2-26)
5600300000600020001
(1-29),(2-10)
5600300000600030001
5600300000600040001
5600300000600050001
5600300000600050002
5600300000700010001
461631
53211803001
5600300000700020001
(1-33),(12-16)
5600300000700020002
5600300000700030001
(1-99),(2-106)
5600300000700040001
5600300000800010001
461624
53211828002
5600300000900010001
461620
53211831002
5600300001000010001
461629
53211804001
5600300001000020001
(1-37),(2-22)
5600300001000030001
5600300001000040001
(1-19),(2-32)
5600300001100010001
461601
53211807001
(3-35),1
5600300001100020001
5600300001100020002
5600300001100030001
5600300001100030002
5600300001100040001
5600300001100040002
5600300001100050001
5600300001100060001
(1-5),(2-10)
5600300001100070001
5600300001100080001
5600300001100090001
5600300001100100001
5600300001100110001
(1-41),(2-32)
5600300001100120001
5600300001100130001
5600300001100140001
(1-37),(2-20)
5600300001200020001
461646
53211816002
5600300001300010001
461614
53211828003
5600300001400010001
461622
53211858002
(2-48),(1-25)
5600300001400020001
5600300001400030001
(1-87),(2-96)
5600300001500010001
461626
53211834003
5600300001500020001
(1-35),(2-4)
5600300001600010001
461645
53211843002
5600300001600020001
5600300001600030001
5600300001600040001
5600300001700020001
53211855002
5600300001800010001
461606
53211852002
5600300001900010001
53211804002
5600300001900020001
5600300001900030001
5600300001900040001
(1-101),(2-100)
5600300002000010001
461604
53211809001
5600300002000020001
5600300002000030001
5600300002000040001
5600300002000050001
5600300002100010001
461628
53211846002
5600300002200010001
461621
53211810001
(1-71),(2-84)
5600300002200020001
5600300002200030001
5600300002200040001
5600300002200050001
(1-21),(2-52)
5600300002200060001
5600300002200070001
(1-45),(2-56)
5600300002200080001
5600300002200090001
5600300002200100001
5600300002200110001
5600300002200110002
5600300002400010001
53211843008
5600300002400020001
5600300002400030001
5600300002500010001
461618
53211813001
5600300002500020001
(1-65),(2-56)
5600300002500030001
5600300002500040001
5600300002500050001
(1-61),(2-56)
5600300002500060001
(1-81),(2-78)
5600300002500070001
5600300002500080001
5600300002700010001
53211843003
5600300002700020001
5600300002700030001
5600300002700040001
5600300002700050001
(1-43),(2-70)
5600300002800020001
53211855003
5600300002800030001
(1-49),(2-32)
5600300002900010001
53211816001
(1-61),(2-28)
5600300002900020001
5600300002900020002
5600300002900030001
(25-31),(32-36)
5600300002900030002
(1-43),(2-22)
5600300003100010001
53211807003
5600300003100020001
5600300003100030001
5600300003100040001
(1-43),(2-14)
5600300003200010001
53211802005
(1-59),(2-42)
5600300003200020001
5600300003300010001
461612
53211819001
(3-97),(2-134)
5600300003300020001
5600300003300030001
(1-151),(6-184)
5600300003300040001
5600300003400010001
53211831003
5600300003400020001
5600300003400030001
5600300003400030002
5600300003400040001
5600300003500010001
53211813002
5600300003500020001
(1-73),(2-50)
5600300003500030001
5600300003500050001
5600300003600010001
461613
53211820001
(1-25),(2-10)
5600300003600020001
5600300003600020002
(19-39),(2-46)
5600300003600030001
5600300003600040001
(1-15),(6-18)
5600300003600050001
(1-45),(2-26)
5600300003700010001
53211822001
(1-37),(2-10)
5600300003700020001
5600300003700030001
5600300003700040001
5600300003800010001
461627
53211825001
5600300003800020001
5600300003800030001
5600300003800040001
5600300003800050001
5600300003800060001
5600300003800070001
5600300003800080001
5600300003800090001
5600300003800100001
5600300003800110001
5600300003800120001
5600300003800130001
5600300003800140001
5600300003800150001
5600300003900010001
53211804003
(1-55),(2-86)
5600300004000010001
461617
53211813003
(1-141),(2-126)
5600300004000020001
5600300004000030001
(1-23),(2-10)
5600300004000040001
5600300004200020001
53211834002
(1-51),(2-14)
5600300004300010001
53211828004
(1-47),(2-22)
5600300004500010001
53211802004
5600300004600010001
53211831001
5600300004600020001
5600300004600030001
5600300004600040001
(19-29),(2-24)
5600300004600050001
(1-17),(2-58)
5600300004600060001
(1-49),(2-102)
5600300004600070001
5600300004600080001
5600300004600090001
5600300004600100001
5600300004600110001
5600300004600120001
5600300004600140001
(1-41),(2-72)
5600300004600150001
5600300004600160001
(1-71),(2-46)
5600300004600170001
(1-91),(2-60)
5600300004600180001
5600300004600190001
5600300004600200001
5600300004600210001
5600300004600220001
5600300004600230001
5600300004600240001
5600300004600250001
5600300004600260001
(1-21),(2-12)
5600300004600280001
5600300004600290001
5600300004600300001
5600300004600310001
(1-73),(2-10)
5600300004700010001
53211807004
(14-62)
5600300004700010002
5600300004800010001
53211846003
5600300004800020001
5600300004900010001
461603
53211832001
5600300004900020001
5600300004900030001
5600300004900040001
5600300004900050001
5600300004900060001
5600300004900070001
5600300004900080001
(1-5),17,(2-24)
5600300005000010001
53211820004
5600300005000020001
5600300005100010001
53211819002
5600300005200010001
53211820002
5600300005200010002
(5-7),11,(4-12)
5600300005200010003
(33-39),1,27,43
5600300005200020001
(4-46),(19-23)
5600300005200020002
(2-8),16
5600300005200030001
(1-67),(2-110)
5600300005400010001
53211834001
5600300005400020001
5600300005500010001
53211846004
5600300005600010001
461623
53211858003
5600300005700010001
53211843004
(1-79),(2-12)
5600300006600010001
5600300006600020001
(1-109),117
5600300006700010001
53211843001
(4-116)
5600300006700010002
5600300006700020001
(1-29),(20-26)
5600300006700030001
5600300006700040001
(1-11),29
5600300006700050001
(2-14),30
5600300006700050002
(1-55),(2-6)
5600300006700060001
5600300006700060002
(1-15),31
5600300006700070001
(2-14),32
5600300006700070002
(1-75),(2-60)
5600300006700080001
(1-35),2
5600300006700090001
5600300006700100001
5600300006700110001
5600300006700120001
(1-25),(8-30)
5600300006700130001
(1-17),(2-12)
5600300006700140001
5600300006700150001
5600300006700160001
5600300006700170001
(1-45),(2-32)
5600300006700190001
5600300006700210001
5600300006700210002
5600300006800020001
53211846001
(1-87),(2-36)
5600300006800030001
5600300006800040001
(1-55),(2-44)
5600300006800050001
5600300006800060001
5600300006900010001
461616
53211849001
(1-23),(2-4)
5600300006900020001
5600300006900030001
5600300006900040001
(1-83),(2-100)
5600300006900050001
(1-141),(2-56)
5600300006900060001
5600300006900070001
5600300007000020001
53211852001
5600300007000030001
5600300007000040001
(1-83),(2-86)
5600300007000050001
5600300007000060001
5600300007100010001
53211820003
(1-7),(2-32)
5600300007200010001
53211807005
5600300007300010001
53211843006
(1-95),(2-118)
5600300007500010001
53211855001
5600300007500020001
5600300007500030001
5600300007500040001
5600300007500050001
5600300007600010001
53211828001
5600300007600020001
5600300007800010001
53211809002
5600300007800040001
5600300007800050001
5600300007800060001
5600300008000010001
53211807006
(1-45),(2-18)
5600300008000020001
5600300008000030001
(1-21),(2-84)
5600300008100010001
53211855006
5600300008100030001
5600300008100050001
5600300008100060001
5600300008200010001
53211858001
5600300008200020001
5600300008200040001
2,(1-3)
5600300008200050001
(1-145),(2-84)
5600300008200060001
5600300008200070001
5600300008200080001
(1-103),(2-136)
5600300008200090001
5600300008200100001
5600300008200110001
(1-145),(2-124)
5600300008500010001
461625
53211834004
(1-79),(2-54)
5600300008500020001
5600300008500030001
5600300008600010001
461648
53211822004
(1-89),(2-126)
5600300008700010001
53211831004
5600300008800010001
53211825004
5600300008800020001
(1-61),(2-86)
5600300008900010001
53211852004
5600300008900020001
(1-29),(2-4)
5600300009000010001
53211807007
5600300009000020001
(2-70),(1-57)
5600600100000010001
461900
5617
53427000000
(72-998),57,(59-999)
5600600100000010002
461901
5600600100000240001
5600600100000240002
461903
1-84,(86-94)
5600600100000450001
(96-998),(85-999)
5600600100000450002
1-148,(150-172)
5600600100000460001
(174-998),(149-999)
5600600100000460002
5600600100000560001
5600600100000560002
1-47,(49-57)
5600600100000600001
(48-998),(59-999)
5600600100000600002
1-99,(101-139)
5600600100000840001
(100-998),(141-999)
5600600100000840002
1-70,(71-101)
5600600100000860001
70,(72-998),(103-999)
5600600100000860002
1-60,62
5600600100001010001
(64-998),(61-999)
5600600100001010002
1-32,37
5600600100001420001
33,35,(36-998),(39-999)
5600600100001420002
1-163,165,167
5600600100001480001
(164-998),(169-999)
5600600100001480002
1-80,(82-96)
5600600100001490001
(98-998),(81-999)
5600600100001490002
79,(139-169)
5800000100000440001
440600
5834
56401364000
84,132,132
5800000100000440002
440044
(201-219),(1-77),(81-117)
5800000100000440003
5836
56401368000
133,137,(148-210)
5800000100000440004
440008
(2-40),(44-96)
5800000100000440005
(1-91),(103-999)
5800000100000530001
440052
,1,1,1,65,71,(93-101)
5800000100000530002
5837
56401377000
(1-51),(2-78)
5800000100000700001
(53-999),(80-998)
5800000100000700002
440034
9,12,(13-69),69,(14-76)
5800000100001330001
(71-999),(78-998)
5800000100001330002
5800000100001330003
440026
5800000100001340001
440039
5835
56401373000
5800000100001340002
440028
1-14,16,18-23,33-999
5800000100001400001
5800000100001400002
440018
5800000100001400003
5800000100001430001
5800000100001430002
440011
2,4,(81-999),(62-998)
5800000100001620001
(1-79),(6-60)
5800000100001620003
6-16,32
5800000100002090001
1-5,17-31,33-999
5800000100002090002
15,15-999
5800000100002110001
440061
2,2,2,1-14
5800000100002110002
5800000100002110003
32,51,51,51
5800000100002680001
440009
(1-49),52-999,(42-50)
5800000100002680002
5800000100002680003
440007
(1-5),(2-20)
5800000100002720001
(7-999),(22-998)
5800000100002720002
440023
(1-67),78
5800000100002850001
(69-999),(80-998)
5800000100002850002
5800000100002850003
5800000100002960001
440060
(33-999),(20-998)
5800000100002960002
(1-79),(2-20)
5800000100002970001
(81-999),(22-998)
5800000100002970002
5800000100002990001
5800000100002990002
1-5,19
5800000100003030001
6-18,20-999
5800000100003030002
(1-15),(49-999),(2-34),(44-998)
5800000100003250001
(17-47),(36-42)
5800000100003250002
5800000100003280001
5800000100003280002
(1-63),(2-50)
5800000100003570001
(65-999),(52-998)
5800000100003570003
1-10,12-23,25-999
5800000100003580001
5800000100003580002
5800000100003580003
1,2,64,66-999
5800000100003590001
(3-65),(4-62)
5800000100003590002
5800000100003620001
5800000100003620002
5800000100003770001
5800000100003770002
5800000100003870001
,(1-13)
5800000100003870002
5800000100003970001
440066
5800000100003970002
440071
(1-13),(2-6),(39-999),(30-998)
5800000100004040001
(15-37),(8-28)
5800000100004040002
(1-37),(41-999)
5800000100004080001
,39
5800000100004080002
5800000100004100001
5800000100004100002
5800000100004220001
440015
5800000100004220002
2,7,7,(89-101)
5800000100004440001
34,38,(42-46),103-106
5800000100004440002
(2-8),(28-40),(39-53),(86-102)
5800000100004440003
3,3
5800000100004440004
(1-59),(2-90),91
5800000100004460001
440012
(61-89),(93-999),(92-998)
5800000100004460002
440058
(1-11),12-999
5800000100004540001
5800000100004540002
5800000100004790001
2,(1-13),(10-34)
5800000100004790002
(23-999),(36-998)
5800000100004790003
440003
5800000100004870001
1,2,6,10,(79-999),(80-998)
5800000100004870002
5800000100005090001
(91-999),(90-998)
5800000100005090002
1,(9-27),(2-12)
5800000100005140001
440027
3,5,7
5800000100005140002
440014
1,3,8,10,16,18,18,20,27
5800000100005450001
440031
39,(20-28)
5800000100005450002
(1-29),(2-16)
5800000100005450003
(1-77),(2-70)
5800000100005960001
(79-999),(72-998)
5800000100005960002
26,26,35,35,39,41
5800000100005970001
5800000100005970002
(11-33),37,(43-999),(2-24),(28-998)
5800000100005970003
5800000100006240001
440046
5800000100006240002
1,1,(2-8)
5800000100006270001
(3-11),(10-18),1,2
5800000100006270002
1-26,28-32,34-44,46-49
5800000100006480001
27,33,45,50,54,56
5800000100006480002
1,28,30,41,(115-999),(126-998)
5800000100006510001
(3-39),(2-26)
5800000100006510002
(43-55),(32-124)
5800000100006510003
(57-113)
5800000100006510004
440047
(1-73),(2-58)
5800000100006910001
5800000100006910002
5800000100007010001
(27-39),(34-50)
5800000100007010002
(41-53),(52-80),129-999
5800000100007010003
(55-127),(82-128)
5800000100007010004
1-15,40,42-999
5800000100007070001
(17-41),(16-38)
5800000100007070002
(1-7),(2-34)
5800000100007490001
(9-999),(36-998)
5800000100007490002
5800000100007520001
(21-27),(31-53),(30-40)
5800000100007520002
(55-89),(16-28),(42-62)
5800000100007520003
5800000100007520004
5800000100008010001
(39-59),(36-62)
5800000100008010002
5800000100008210001
27-84
5800000100008210002
5800000100008220001
23-42
5800000100008220002
60-999,(46-58)
5800000100008270001
5800000100008270002
(29-59),(32-44)
5800000100008270003
1-6,8-999
5800000100008410001
5800000100008410002
1-117
5800000100008530001
118-138
5800000100008530002
5800000100008530003
140,142-157,197-999
5800000100008530004
158-196
5800000100008530005
19,21
5800000100008770001
(1-19),21,(23-91),(2-86)
5800000100008770002
(97-999),(100-998)
5800000100008770003
440068
1,3,4,6,10
5800000100008960001
2,5,7-9,11-33,(35-43),(40-88),(59-93)
5800000100008960002
(45-57),(34-38)
5800000100008960003
128,141,(95-999),(90-998)
5800000100008960004
(1-101),(2-104)
5800000100009140001
(103-137),(106-128)
5800000100009140002
117,125
5800000100009180001
68,81,83,115,(81-115),(119-123)
5800000100009180002
1,2,2,3,3,1-67,69-80
5800000100009180003
(82-998),(127-999)
5800000100009180004
5800000100009290001
5800000100009290002
5800000100009690001
(17-53),(26-56)
5800000100009690002
5800000100009690003
8,24,30,32,(33-37),38,(42-54),43
5800000100010050001
(1-31),(2-6),(10-28)
5800000100010050002
24,(28-32),(39-43)
5800000200000030001
442963
5838
56534000000
5800000200000030002
442964
6/17,9/20,4,4,10,11,12,12,13-20,22
5800000200000030003
442960
3,5,13
5800000200000110001
442965
(6-36),26,28,30
5800000200000110002
1-6,8-23,(26-30)
5800000200000160001
5800000200000160002
442962
(32-40),(44-50)
5800000200000160003
(45-53),54-66,67-74
5800000200000160004
36,40,42,46,48,(52-66),(72-92)
5800000200000200001
1-3,5,7-9,10,13-18,22,22,24,(28-34)
5800000200000200002
94,96
5800000200000200003
1,1,1,(7-17)
5800000200000250001
22,24,28,30,32,33
5800000200000250002
1-187
5801100100000060001
442247
5802
56229501000
189-999
5801100100000060002
442240
5801100100000150001
442246
5801100100000150002
5801100100000190001
(65-999),(70-998)
5801100100000190002
442248
5801100100000230001
5801100100000230002
1-105
5801100100000430001
107-999
5801100100000430002
5801100100000730001
5801100100000730002
5801100100000950001
5801100100000950002
1-14,17,19-999
5801100100001120001
15,16,18
5801100100001120002
1-21,23-28,30,32-999
5801100100001130001
22,29,31
5801100100001130002
5801100100001260001
5801100100001260002
5801100100001320001
5801100100001320002
5801500100000540001
442544
5803
56405000000
5801500100000540002
442537
1,3,(71-345),(68-214)
5801500100000570001
442530
2/2,1,9,13,2,2,4
5801500100000570002
442543
345,(347-373),(216-242)
5801500100000570003
442533
(15-67),(2-66)
5801500100000570004
442539
1,(45-55),4
5801500100000780001
(1-43),(4-46)
5801500100000780002
5801500100000830001
5801500100000830002
(1-229),(2-120)
5801500100000890001
(231-315),(122-222)
5801500100000890002
(1-53),(2-52)
5801500100000920001
(363-999),(340-998)
5801500100000920002
(55-361),(54-338)
5801500100000920003
(3-345),(32-380)
5801500100000970001
(347-999),(382-998)
5801500100000970002
5801500100000970003
(1-127),(2-94)
5801500100001050001
(129-999),(96-998)
5801500100001050002
5801500100001070001
5801500100001070002
(1-87),(2-62)
5801500100001140001
(89-123),(64-94)
5801500100001140002
5801500100001150001
(339-999),(432-998)
5801500100001150002
(75-337),(64-430)
5801500100001150003
(1-151),(2-158)
5801500100001320001
(153-999),(160-998)
5801500100001320002
1,(99-151),(64-84)
5801500100001410001
300-309
5801500100001410002
442458
(1-97),(2-62)
5801500100001410003
(86-152),153-299
5801500100001410004
(1-91),(2-34)
5801500100001440001
(317-335),(340-596)
5801500100001440002
(93-315),(36-338)
5801500100001440003
137,(952-998)
5801500100001510001
(1-137),(2-50)
5801500100001510002
(1-89),(2-82)
5801500100001600001
(91-129),(84-998)
5801500100001600002
5801500100001640001
(39-999),(18-998)
5801500100001640002
(1-31),(2-42)
5801500100001650001
(33-999),(44-998)
5801500100001650002
(1-25),(2-44)
5801500100001680001
(27-331),(46-346)
5801500100001680002
(333-999),(348-998)
5801500100001680003
(1-55),(2-78)
5801500100001690001
(57-999),(84-998)
5801500100001690002
5801500100001710001
(41-75),111,(38-170)
5801500100001710002
(77-109),113,(172-184)
5801500100001710003
(1-75),(2-98),100
5801500100001780001
(159-999),(136-998)
5801500100001780002
442542
(77-117),(100-130)
5801500100001780003
19,21,(20-98)
5801500100001890001
5801500100001890002
5801500100001910001
(115-123),(128-156)
5801500100001910002
5801500100002010001
(23-107),21,(22-108)
5801500100002010002
5801500100002030001
(57-999),(56-999)
5801500100002030002
5801500100002060001
(21-179),(16-154)
5801500100002060002
5801500100002130001
2
5801500100002130002
5801500100002140001
(23-999),(24-998),22,22
5801500100002140002
(1-37),(2-12)
5801500100002160001
(39-81),(14-22)
5801500100002160002
5801500100002170001
(69-75),(84-100)
5801500100002170002
(77-151),(102-136)
5801500100002170003
16,17
5801500100002500001
5801500100002500002
(1-34)
5802200100001290001
442128
5827
56251501000
5802200100001290002
442127
2 ,2¡,2¢,2£,1 ,1¡,3,5
5802500100000030001
442891
5805
56256501000
(2-40),(9-109)
5802500100000030002
442895
(22-38),(23-51)
5802500100000080001
(6-14),(3-21)
5802500100000080002
(2-18),(24-60),(1-13),(23-51)
5802500100000130001
442894
(20-22),17
5802500100000130002
5802500100000300001
(14-22)
5802500100000300002
(71-79),(66-72)
5802500100000390001
(2-64),(1-69)
5802500100000390002
(1-89),(2-102)
5802500100000440001
(112-122),(93-97)
5802500100000440002
(2-212),(1-235)
5802500100000580001
(224-236),(237-293)
5802500100000580002
(12-24),(11-23)
5802500100000620001
(2-4),(28-34),48,(1-3),27
5802500100000620002
442893
(1-227),(2-154)
5802500100000660001
(156-176),(229-259)
5802500100000660002
4 
5802500100000830001
(10-78)
5802500100000830002
2,(5-9)
5802500100000870001
(10-16),(23-45)
5802500100000870002
(2-80),(1-107)
5802500100001330001
(92-94),(115-127)
5802500100001330002
2,3,5,10
5802500100001470001
(12-92),(29-97)
5802500100001470002
(43-49)
5802500100001660001
(2-42),(1-35)
5802500100001660002
(1-159),(2-162)
5802600000100060001
442571
5826
5831
56257551000
(161-183),(168-214)
5802600000100060002
442585
42,(30-36),(33-45)
5900000100000040001
614000
5904
57401380000
5900000100000040002
614002
(38-40),(44-104),(108-998),(47-101)
5900000100000040003
614007
(14-24),(1-17)
5900000100000070001
614066
5905
57401367000
(32-998),(21-999)
5900000100000070002
614022
3,4,(8-34),(7-39)
5900000100000110001
614101
5908
57401370000
2,5,6,(44-82),(41-107)
5900000100000110002
614113
5900000100000150001
(26-998),(23-999)
5900000100000150002
(2-30),(1-31)
5900000100000170001
614023
(36-998),(49-999)
5900000100000170002
614109
(4-6),(1-19)
5900000100000320001
5902
57401372000
5900000100000320002
614068
(18-998),(21-999)
5900000100000350001
5900000100000350002
(4-8),(3-25)
5900000100000500001
614014
5906
57401375000
(52-998),(29-65)
5900000100000500002
614107
(22-82),(69-71)
5900000100000700001
(8-16),(5-19)
5900000100000700002
224,(175-209)
5900000100000720001
614083
(2-222),(1-173),(235-243)
5900000100000720002
614089
5900000100000800001
5900000100000800002
(32-42),(27-999)
5900000100000870001
(6-14),(5-7)
5900000100000870002
5900000100000930001
614039
5900000100000930002
614010
(6-24),(7-41)
5900000100000930003
5900000100001040001
614036
(10-38),(21-35),44
5900000100001040002
(40-42),(46-998),(39-999)
5900000100001040003
614065
(148-190),(111-161)
5900000100001330001
(192-998),(163-999)
5900000100001330002
5903
57401365000
(2-146),(1-109)
5900000100001330003
(2-62),(1-85)
5900000100001390001
5900000100001470001
5900000100001470002
5900000100002050001
5900000100002050002
(12-998),(13-999)
5900000100002090001
614053
5900000100002090002
5900000100002170001
614026
5907
57401378000
(32-38),(15-23)
5900000100002170002
614038
(2-60),(1-63)
5900000100002200001
614112
(62-998),(65-999)
5900000100002200002
614030
5900000100002240001
614097
(39-999)
5900000100002240002
(2-4),(1-999),(8-998)
5900000100002260001
5900000100002260002
(10-44),(39-61)
5900000100002290001
614070
(2-8),(1-37)
5900000100002290002
614060
(46-68),70,(65-999)
5900000100002290003
614077
5900000100002290004
5900000100002300001
(32-40),(33-35)
5900000100002300002
(42-998),(45-999)
5900000100002300003
5900000100002340001
(2-998),(1-33)
5900000100002340002
(2-64),(1-35)
5900000100002560001
614047
(72-94),(53-55)
5900000100002560002
614104
5900000100002580001
614088
(4-34),(19-33)
5900000100002580002
(2-36),(1-13)
5900000100002600001
(42-48),(41-89),(15-37)
5900000100002600002
614064
(50-110),(91-999)
5900000100002600003
614025
2,(5-7)
5900000100002680001
(4-998),(9-999)
5900000100002680002
614016
5900000100002690001
(2-30),(19-39)
5900000100002690002
4,9
5900000100002880001
5900000100002880002
5900000100003490001
614111
5900000100003490002
614033
(12-56)
5900000100003490003
614090
5900000100003540001
614058
(4-10),1,7
5900000100003540002
614037
(2-4),(9-19)
5900000100003600001
(6-12),(3-7)
5900000100003600002
(18-66),(23-85)
5900000100003660001
(2-4),(1-21)
5900000100003660002
(144-180)
5900000100003790001
(182-998),(3-25)
5900000100003790002
5900000100003860001
(104-998),(103-999)
5900000100003860002
614067
5900000100003860003
2,(110-194),(13-999)
5900000100003960001
5900000100003960002
(20-998),(15-999)
5900000100004160001
614017
(4-18),(3-13)
5900000100004160002
5900000100004350001
(80-998),(83-999)
5900000100004350002
(16-998),(47-999)
5900000100004360001
(2-4),(3-17)
5900000100004360002
(2-46),(1-49)
5900000100004440001
(48-998)
5900000100004440002
(2-50),(1-51)
5900000100004560001
(52-998),(53-999)
5900000100004560002
(4-50),17
5900000100004630001
(74-88),(65-999)
5900000100004630002
32,(34-80)
5900000100004680001
5900000100004680002
5900000100004680003
(24-32),(35-37)
5900000100004680004
5900000100004680005
(110-136),140,(99-109),115,117,125,135
5900000100004690002
614012
(2-108),(1-15),(19-97)
5900000100004690003
5900000100004910001
(2-82),(1-97)
5900000100004910002
(86-96)
5900000100004910003
(148-160),(153-161)
5900000100004930001
(162-998),(163-999)
5900000100004930002
(2-146),(1-69)
5900000100004930003
(130-998),171
5900000100004940001
(26-82),(31-75)
5900000100004940002
(84-128)
5900000100004940003
614032
(4-18),(3-21)
5900000100004940004
(60-998),(95-999)
5900000100005270001
(2-56),(1-93)
5900000100005270002
58
5900000100005270003
(2-40),(1-33)
5900000100005290001
(42-44)
5900000100005290002
(46-72),(35-69)
5900000100005290003
(74-998),(71-999)
5900000100005290004
5900000100005350001
(36-998),(31-999)
5900000100005350002
(154-196),(195-415)
5900000100005460001
5900000100005460003
614094
5900000100005460004
(167-193)
5900000100005460005
(111-141),173,173
5900000100005460006
(41-57)
5900000100005460008
(106-108)
5900000100005460009
614087
(110-114)
5900000100005460010
5900000100005460011
(304-320),328,330,332,(368-374)
5900000100005460012
5948
57246848000
(46-104),(59-109)
5900000100005460014
614081
(2-66),(1-53)
5900000100005600001
(68-998),(55-999)
5900000100005600002
(38-42),(3-33)
5900000100005670001
(44-58),(37-43)
5900000100005670002
1,(28-998),(29-999)
5900000100005710001
5900000100005710002
(2-26),(13-27)
5900000100005710003
(2-24),(1-41)
5900000100005860001
(26-998),(43-999)
5900000100005860002
5900000100005910001
5900000100005910002
(14-66)
5900000100005910003
(6-10)
5900000100005910004
(68-998)
5900000100005910005
48,(41-53),35
5900000100005930001
(6-36),(57-999),64
5900000100005930002
5900000100005940001
(38-56),(37-61)
5900000100005940002
(68-998),(63-999)
5900000100005940003
(2-30),(1-9)
5900000100005960001
(34-998),(13-999)
5900000100005960002
(117-125)
5900000100006030001
(118-998),(143-999)
5900000100006030002
5900000100006030003
(50-82),(47-85)
5900000100006030004
(86-114),(87-113)
5900000100006030005
5900000100006030007
614006
(22-32),(9-37)
5900000100006240001
(36-998),(39-999)
5900000100006240002
614042
(2-18),1
5900000100006240003
5900000100006260001
(20-42),(21-35)
5900000100006260002
(44-998),(37-999)
5900000100006260003
5900000100006330001
(2-66),(1-49)
5900000100006330002
(70-82)
5900000100006330003
(84-998),(57-999)
5900000100006330004
5900000100006330005
614096
(36-56)
5900000100006370002
(4-34),(3-45)
5900000100006370003
(58-998),(47-999)
5900000100006370004
5900000100006760001
5900000100006760002
(128-998),(131-999)
5900000100006890001
(2-74),(1-97)
5900000100006890002
(80-126),(99-129)
5900000100006890003
5900000100006950001
(40-998),(41-999)
5900000100006950002
5900000100006960001
5900000100007030001
(24-86),25
5900000100007030002
(94-998),89
5900000100007030003
5900000100007070001
5900000100007070002
5900000100007070003
614051
(110-112),(123-999)
5900000100007090001
5900000100007090002
(52-60),(43-49)
5900000100007090003
(62-92),(51-101)
5900000100007090004
(106-998),(81-119)
5900000100007230001
5900000100007230002
(28-100),(43-61)
5900000100007230003
(2-52),(164-998),(11-57),(165-999)
5900000100007400001
(66-112),(81-139)
5900000100007400002
4,(3-45)
5900000100007530002
(76-112),(47-81)
5900000100007530003
(114-998),(83-999)
5900000100007530004
(6-74)
5900000100007530005
5900000100008040001
5900000100008040002
5900000100008140001
5900000100008140002
(44-78),(82-998),(43-999)
5900000100008530001
(2-42),(1-41)
5900000100008530002
5900000100008620001
614015
(2-96),(1-101)
5900000100008620002
(98-998),(115-999)
5900000100008620003
5900000100008900001
(27-45)
5900000100008910001
614046
(101-999)
5900000100009100001
(14-16),(69-71)
5900000100009100002
5900000100009110001
5900000100009110002
(2-46),(1-41)
5900000100009250001
(48-998),(49-999)
5900000100009250002
10,(45-79)
5900000100009370001
5900000100009370002
5900000100009370003
5900000100009440001
(2-24),(28-998),(7-27),(35-93)
5900000100009440002
5900000100009480001
(44-998),(41-999)
5900000100009480002
(19-57)
5900000100009540001
(2-54),(1-11)
5900000100009540002
5900000100009540003
5900000100009540004
138,(61-999)
5900000100009880001
(2-134),(1-49)
5900000100009880002
5900000100009900001
(100-998),(89-125)
5900000100009900002
5900000100009900003
(78-94)
5900000100009900004
98
5900000100009900006
(39-55)
5900000100010080001
(16-36),(1-17)
5900000100010080002
5900000100010100001
(26-56),31
5900000100010100002
5900000100010100003
(2-20),(1-31)
5900000100010130001
(36-998),(35-999)
5900000100010130002
(122-132),(134-998)
5900000100010380002
(2-88),(1-19),(91-105)
5900000100010380003
(94-96),(100-120)
5900000100010380004
20,(42-60),(41-59)
5900000100010390001
(16-18),(22-30)
5900000100010390002
(38-40),(1-3)
5900000100010390003
5900000100010610001
(16-52),17,21,25,(33-41)
5900000100010610002
58,(43-49)
5900000100010610003
32,(1-55)
5900000100010640001
5900000100010640002
5900000100010770001
(20-998),(27-999)
5900000100010770002
19,19
5900000100010800001
5900000100010800002
(14-18),3,(7-15)
5900000100011070001
(6-8)
5900000100011070002
(114-118)
5900000100011140001
(128-998),(159-999)
5900000100011140002
(2-112),(1-83)
5900000100011140003
(34-998),(33-49),(53-999)
5900000100011150001
(4-30),(3-31)
5900000100011150002
(34-998),(37-999)
5900000100011180001
(2-32),(1-35)
5900000100011180002
(2-14),(1-27)
5900000100011190001
(24-998),(29-999)
5900000100011190002
306,(291-999)
5900000100011210001
(2-234),(1-271)
5900000100011210002
(236-276),(273-285)
5900000100011210003
614056
287
5900000100011210004
614054
(176-998),(177-999)
5900000100011420001
5900000100011420002
5900000100011420003
(2-174),(147-175)
5900000100011420004
(49-59)
5900000100011450001
(2-42),(46-54),(1-31)
5900000100011450002
(30-998),(75-999)
5900000100011460001
(6-20),(1-37)
5900000100011460002
5900000100011470001
(48-998),(45-999)
5900000100011470002
(2-72),(1-31),(37-39)
5900000100011970001
(74-998),(33-35),(45-999)
5900000100011970002
(4-46),(5-47)
5900000100012100001
(50-54),(57-59)
5900000100012100002
5900000100012220001
(2-16),(20-998)
5900000100012220002
5900000100012380001
(6-14),(7-39)
5900000100012380002
(108-998),(109-999)
5900000100012500001
(2-66),(1-9)
5900000100012500002
(74-78),(11-85)
5900000100012500003
(80-106),(87-105)
5900000100012500004
(2-66),(1-65)
5900000100012720001
(68-998),(67-999)
5900000100012720002
5900000100012760001
(30-998),(33-999)
5900000100012760002
5900000100013240001
(6-16),(3-15)
5900000100013240002
(12-998),(11-999)
5900000100013320001
5900000100013320002
(2-24),(1-9)
5900000100013400001
5900000100013400002
5900000100013480001
(32-998),(31-999)
5900000100013480002
5900000100014250001
5900000100014250002
46 ,70,72,(48-68),(51-89)
5900000100014540001
(2-40),(1-45)
5900000100014540002
(42-46),(47-49)
5900000100014540003
(70-998),(93-999)
5900000100014540004
(40-48)
5900000100014650001
(86-90),(95-999)
5900000100014650002
(7-9),(4-50)
5900001100000540001
618551
5919
57430000000
(61-63),(60-74)
5900001100000540002
618554
21,23,28
6000000100000070001
180019
6027
58401000000
6000000100000070002
180006
78,78,80
6000000100000160001
180021
6000000100000160002
15/16,(52-76),(73-87),26
6000000100000160003
6000000100000410001
(15-37),(18-36)
6000000100000410002
2,3,5,8
6000000100000480001
180000
7,9-26,79
6000000100000480002
180017
34,(1-25),(2-32)
6000000100000650001
180014
42-50
6000000100000650002
180005
7,9,10
6000000100000680001
180680
1-5,8
6000000100000680002
6000000100000690001
50,10,11,13
6000000100000690002
(21-25),(62-100)
6000000100000690003
6000000100000760001
(88-116),(89-123)
6000000100000760002
(118-158),(125-155)
6000000100000760003
(1-25),27,29,2
6000000100000830001
180016
6000000100000830002
180007
6000000100000900001
19-40
6000000100000900002
(41-65),(71-73),(42-62),68
6000000100000900003
180024
(1-71),(2-48)
6000000100001120001
180004
(50-86)
6000000100001120002
30-50
6000000100001170002
32,34,36,47,49
6000000100001190001
(5-23),2,25
6000000100001190002
(4-14),(33-45)
6000000100001190003
(117-131),111,92,110,110
6000000100001210001
116,122,122,126,124
6000000100001210002
180020
(2-90),113,115,(1-109)
6000000100001210003
24,28,1-10,12,28/8
6000000100001280001
(31-99),(30-70)
6000000100001280002
180011
28/3,28/6,28/7,(11-29),(14-18)
6000000100001280003
6000000100001420001
(4-28),(13-21)
6000000100001420002
180002
(1-23),(2-8),10
6000000100001510001
18,(25-31),(12-16),(28-36)
6000000100001510002
32
6000000100001510003
6000000100001770001
180001
(1-21),(25-45),(2-54)
6000000100001770002
6000000100001890001
(31-51),(50-56)
6000000100001890002
6000000100001980001
(17-47),(22-46)
6000000100001980002
4/1,1,2,3,5,7,9,11,13
6000000100001990002
6000000100002130001
(1-67),(2-60)
6000000100002160001
(69-79),(62-78),93
6000000100002160002
24/26,26,26,22,27,28,30
6000000100002330001
5-20,23,25,29
6000000100002330002
(1-19),21,(2-18)
6000000100002470001
(72-74),76,(78-108)
6000000100002470002
(25-51),(22-68),76/2
6000000100002470003
(66-108),(53-113),118
6000000100002640001
6000000100002640002
(2-116),(1-119)
6000000100002670001
38/2,118,120-162
6000000100002670002
(1-39),(2-50)
6000000100002750001
(41-49),51-106
6000000100002750002
(2-22),(3-9),(13-19),97,89,97 
6000000100002780001
6000000100002780002
6000000100002880001
(27-79),(14-72),76
6000000100002880002
6000000100003060001
(1-93),(28-36),95
6000000100003060002
(2-12),42,(44-96)
6000000100003060003
6000000100003520001
6000000100003520002
(1-15),(4-8)
6000000100003850001
(17-31),(10-36)
6000000100003850002
(1-55),(2-40)
6000000100003900001
(57-71),(42-70)
6000000100003900002
45,47
6000000100003950001
(5-31),(16-36)
6000000100003950002
6000000100004020001
(19-35),(18-34),5
6000000100004020002
6000000100004090001
6000000100004090002
5,6-11
6000000100004090003
(8-16),(1-9)
6000000100004400001
1-19,21,24
6000000100004500001
25-35
6000000100004500002
6000000100004760001
(25-97),(20-92)
6000000100004760002
6000000100005020001
9,11-14
6000000100005020002
6000000100005260001
29-34,35
6000000100005260002
16-58
6000000100005600001
3,4,5,7,8
6000000100005940001
1,3,5,(2-10)
6000000100006080001
(5-29),(12-28)
6000000100006080002
(1-19),(4-32)
6100000100000180001
344004
6194
6162
60401364000
(21-41),(34-78)
6100000100000180002
344058
6100000100000240002
6100000100000460001
344019
6195
6167
60401380000
6100000100000460002
344037
6100000100000460003
(80-990)
6100000100000460004
6100000100000560001
6100000100000560002
6100000100000560003
(74-990)
6100000100000560004
6100000100000610001
344011
6164
60401372000
(35-133),(28-134)
6100000100000610002
344013
6100000100000710001
344020
6193
6166
60401378000
(127-135),(118-176)
6100000100000710002
344094
(1-111),(2-42)
6100000100000780001
6100000100001020001
344025
(2-990)
6100000100001020002
6100000100001090001
(45-999),(50-998)
6100000100001090002
6100000100001150001
(57-999),(44-996)
6100000100001150002
(1-31),(2-64)
6100000100001240001
344033
6168
60401382000
(33-999),(66-999)
6100000100001240002
344055
9-17,23-25
6100000100001290001
344015
1,3,6
6100000100001290002
344103
(25-61),(2-30)
6100000100001410001
6100000100001410002
(1-69)
6100000100001460001
344072
(2-262)
6100000100001460002
(71-999)
6100000100001460003
344111
(264-990)
6100000100001460004
6100000100001610001
6100000100001610002
(3-51),(4-32)
6100000100001670001
(53-999),(34-998)
6100000100001670002
6100000100001690001
344022
6163
60401368000
(47-81)
6100000100001760001
6100000100001760002
344000
6100000100001760003
344010
3,(10-20)
6100000100001870001
1,2,(26-34),(56-74),(31-41),(61-75)
6100000100001940001
6100000100001950001
6100000100001980001
344041
(1-37),(54-92)
6100000100002210001
(39-91),(94-178)
6100000100002210002
344090
1,9,15,17,(6-24)
6100000100002270001
6100000100002300001
6100000100002470001
6100000100002480001
344038
6165
60401374000
(3-55),12
6100000100002480002
6100000100002480003
344068
6100000100002560001
(41-999),(38-999)
6100000100002560002
(1-43),(2-54)
6100000100002700001
344002
(45-67),(56-72)
6100000100002700002
(88-300),(35-301)
6100000100002830001
344065
11,15,17,(21-33),(6-36)
6100000100002850001
(35-73),(38-60),75-219
6100000100002850002
344056
62,64,66,68,70,72,74
6100000100002850003
344095
6100000100002860001
(35-57),(46-78)
6100000100002860002
73-999,(20-72)
6100000100002910001
6100000100002910002
(33-69)
6100000100002910004
6100000100003010001
(83-161),(82-170)
6100000100003010002
(1-41),(2-34)
6100000100003170001
344082
(57-69),(82-98)
6100000100003170002
71,(75-113),(100-140)
6100000100003170003
344006
(115-133),(142-166)
6100000100003170004
6100000100003170005
344052
(43-55),(36-80)
6100000100003170006
(1-73),(2-88)
6100000100003330001
(99-999),(118-998)
6100000100003330002
(75-97),(90-116)
6100000100003330003
(1-23),(2-56)
6100000100003430001
(59-999),(58-998)
6100000100003430002
6100000100003430003
6100000100003490001
6100000100003490002
6100000100003490003
6100000100003490004
344030
(20-990)
6100000100003490005
6100000100003630001
(195-243),(222-228)
6100000100003630002
(341-999),(374-998)
6100000100003630004
(230-278)
6100000100003630006
(15-193),(34-220)
6100000100003630007
6100000100003900001
6100000100003900002
6100000100003900003
(34-990)
6100000100003900004
6100000100004110001
(77-149),(70-130)
6100000100004110002
6100000100004210001
(87-999)
6100000100004210002
6100000100004210003
(5-17),(27-43),(49-75)
6100000100004260001
6100000100004290001
(31-999),(24-44)
6100000100004290002
(25-29),(37-47)
6100000100004340001
(1-23),(2-92)
6100000100004340002
(49-63),67,73,77/3,(102-118)
6100000100004340003
6100000100004410001
(101-119),(90-110)
6100000100004410002
(4-84)
6100000100004410003
(5-61),(2-70)
6100000100004500001
(63-85),(72-106)
6100000100004500002
6100000100004550001
6100000100004550002
6161
60401362000
6100000100004550003
(1-255)
6100000100004600001
344048
(2-286)
6100000100004600002
(290-990)
6100000100004600003
288
6100000100004600004
(257-999)
6100000100004600005
37,39-42,44-999
6100000100004680001
6100000100004680002
6100000100004790001
344079
(13-35),(16-42)
6100000100004790002
6100000100004800001
6100000100004800002
6100000100004800003
(40-990)
6100000100004800004
6100000100004870001
(3-51)
6100000100004880001
6100000100004880002
6100000100004930001
6100000100004930002
344001
(1-103),(2-10)
6100000100005070001
344064
6100000100005070002
344069
(3-51),(6-56)
6100000100005180001
6100000100005240001
6100000100005240002
344039
6100000100005300001
(33-115),131,(38-110),(116-118)
6100000100005300002
124/5,124/6
6100000100005300003
131
6100000100005300004
(1-69),(2-28)
6100000100005330001
6100000100005330002
344093
(53-999),(90-998)
6100000100005340001
(1-51),(2-88)
6100000100005340002
344034
6100000100005380001
6100000100005380002
(127-231),(2-168)
6100000100005410001
6100000100005410002
6100000100005450001
6100000100005450002
(102-998)
6100000100005450003
344018
(51-99),(62-92)
6100000100005450004
6100000100005450005
6100000100005510001
(41-999),(68-999)
6100000100005510002
(47-65),(34-50)
6100000100005530001
6100000100005530002
(106-998),(129-999)
6100000100005590001
(2-98),(1-69)
6100000100005590002
6100000100005730001
6100000100005730002
(32-990)
6100000100005730003
31-999,(22-30)
6100000100005740001
6100000100005740002
(11-89),(16-99)
6100000100005810001
6100000100005810002
6100000100006120001
6100000100006120002
(1-5),(4-10)
6100000100006160001
(7-21),(12-28)
6100000100006160002
(23-39),(43-63),(32-64)
6100000100006160003
6100000100006230001
344101
6100000100006230002
6100000100006360001
6100000100006360002
6100000100006460001
(31-109),(38-108)
6100000100006460002
(8-48)
6100000100006550001
6100000100006550002
6100000100006660001
6100000100006660002
6100000100006660003
(14-990)
6100000100006660004
(99-113),114-194
6100000100006720002
6100000100006770001
(17-75),(12-64)
6100000100006770002
6100000100007040001
41-90
6100000100007040002
(27-57)
6100000100007330001
(40-44),(76-94)
6100000100007330002
(59-75),(83-89),(96-138)
6100000100007330003
6100000100007470001
(43-77),(44-84)
6100000100007470002
6100000100007510001
(53-999),(54-998)
6100000100007510002
6100000100007580001
(1-83),(2-96)
6100000100007610001
(98-999)
6100000100007610002
6100000100007660001
(27-999),(24-999)
6100000100007660002
344091
6100000100007760001
(51-71)
6100000100007760002
6100000100007950001
6100000100007950002
(87-157),(170-210)
6100000100007950003
(212-298)
6100000100007950004
6100000100007950006
6100000100007950007
(124-168)
6100000100007950008
4,(1-9)
6100000100008010001
(15-999),(22-999)
6100000100008100001
6100000100008100002
(113-141),(147-181),185
6100000100008160001
(1-77),87,(93-99),(103-111),(10-32)
6100000100008160002
(36-70),(74-80),(88-108),(112-122)
6100000100008160003
(1-241)
6100000100008180001
(2-258)
6100000100008180002
(243-999)
6100000100008180003
(260-990)
6100000100008180004
6100000100008260001
(45-999),(56-998)
6100000100008260002
(3-9),13,(15-23),(27-31),(35-37)
6100000100008290001
(2-6),(10-24),(32-42)
6100000100008290002
6100000100008420001
(19-79),(18-999)
6100000100008420002
(3-17),(2-22)
6100000100008440001
(19-999),(24-998)
6100000100008440002
(18-998),(43-999)
6100000100008610003
(1-41),(2-16)
6100000100008610004
(54-88),(101-127)
6100000100008750002
(1-99),(2-48)
6100000100008750003
(159-177),(112-196)
6100000100008850001
(1-69),(2-34)
6100000100008850002
(71-79),(36-50)
6100000100008850003
(81-125),(52-114)
6100000100008850004
(1-99),(2-110)
6100000100008950001
(101-127),(112-999)
6100000100008950002
(3-99),(4-122)
6100000100008960001
(101-165),(124-186)
6100000100008960002
6100000100009070001
(39-157),(42-166)
6100000100009070002
(1-43),(2-34),42
6100000100009150001
(45-99),(36-40),(44-108)
6100000100009150002
1-19,21-32
6100000100009190001
6100000100009240001
(25-63),(36-56)
6100000100009240002
(191-199),200-999
6100000100009350002
(1-47),(2-30)
6100000100009420002
293-999,(268-292)
6100000100009510001
(1-109),(2-70)
6100000100009510002
(151-157),(108-126)
6100000100009510003
(159-215),(128-138)
6100000100009510004
(217-291),(178-260)
6100000100009510005
(140-176)
6100000100009510006
1-19,23
6100000100009570001
(188-338),(223-299)
6100000100009610001
(1-153),(2-126)
6100000100009610002
(153-163),(128-204)
6100000100009610003
(23-101),(16-94)
6100000100009650001
(1-21),(2-14)
6100000100009650002
6100000100009800001
46-70
6100000100009800002
(31-39)
6100000100009820001
344029
(1-29),
6100000100009820002
344112
6100000100009870001
(49-999),(50-999)
6100000100009870002
(57-99),(70-94)
6100000100009980001
(3-29),(101-117),(2-68)
6100000100009980002
(96-999)
6100000100009980003
6100000100010010001
(35-105),(36-98)
6100000100010010002
6100000100010050001
344012
6100000100010050002
(67-81),(114-152)
6100000100010050003
(33-39),(2-112)
6100000100010050005
6100000100010050006
6100000100010110001
(24-108),(27-129)
6100000100010110002
(1-215)
6100000100010250001
6100000100010300001
(30-38),(157-163)
6100000100010300002
6100000100010420001
75-82,84
6100000100010420002
(43-73),(50-74)
6100000100010420003
6100000100010500001
6100000100010500002
(29-103)
6100000100010500003
(26-92)
6100000100010500004
6100000100010570001
6100000100010570002
6100000100010570003
(26-990)
6100000100010570004
(137-285)
6100000100010610002
(132-160)
6100000100010610003
(162-999)
6100000100010610004
344023
6100000100010610005
(80-128)
6100000100010610006
(79-135),(82-130)
6100000100010610007
6100000100010610008
(28-182),(1-139)
6100000100010710002
(141-999),(186-998)
6100000100010710004
6100000100010710005
(1-21),(25-47),(51-55),(65-69)
6100000100010750001
(2-48),(52-58),62
6100000100010750002
64,(68-106),(71-95)
6100000100010750003
6100000100010820001
(63-73),(66-74)
6100000100010820002
(76-78)
6100000100010820003
(50-998),(53-999)
6100000100010850001
6100000100010850002
1-13,15,17
6100000100010900001
(1-119),(4-26)
6100000100010940002
6100000100011100001
(25-219)
6100000100011100002
(2-230)
6100000100011100003
(221-999)
6100000100011100004
(232-990)
6100000100011100005
6100000100011160001
(64-78),(91-107)
6100000100011160002
(49-89),(42-62)
6100000100011160003
6100000100011220001
344032
(6-120),(11-117)
6100000100011220002
122/1
6100000100011220003
6100000100011250001
(45-67),(46-78)
6100000100011250002
6100000100011290001
47-75
6100000100011290002
(1-39),(2-42),43
6100000100011330001
(41-999),(44-999)
6100000100011330002
6100000100011410001
(21-29),(12-28)
6100000100011410002
6100000100011410003
6100000100011650001
(11-999),(16-998)
6100000100011650002
(143-999),(94-998)
6100000100011670001
(1-141),(2-92)
6100000100011670002
2-51,53-60,62-89,91
6100000100011780001
11,41
6100000100011790001
(1-9),(13-999),(2-998)
6100000100011790002
6100000100011830001
(48-64)
6100000100011830002
(1-23),(2-36)
6100000100011840001
(25-999),(38-998)
6100000100011840002
6100000100011950001
6100000100011950002
(16-184)
6100000100011950003
(135-999)
6100000100011950004
(186-990)
6100000100011950005
2,5
6100000100011980001
6100000100011980002
6100000100012060001
(33-999),(34-998)
6100000100012060002
6100000100012080001
6100000100012080002
3,17,(19-999),(122-999)
6100000100012080003
2-94,(96-118)
6100000100012130001
36,38,40,42,(83-999),(86-220)
6100000100012140001
(1-81),(2-84)
6100000100012140002
6100000100012210001
6100000100012210002
(1-41),(2-88)
6100000100012260001
(43-999),(90-998)
6100000100012260002
6100000100012310001
6100000100012310002
6100000100012310003
6100000100012470001
6100000100012470002
6100000100012510001
6100000100012510002
(18-30),34,36-72
6100000100012510003
6100000100012590001
(27-119),(16-116)
6100000100012590002
(1-5),2
6100000100012600001
(9-15),(4-12)
6100000100012600002
(281-999),(256-998)
6100000100012660001
(1-279),(2-254)
6100000100012660002
(1-91),(2-4)
6100000100012720001
(95-999),(6-202)
6100000100012720002
6100000100012800001
6100000100012800002
(2-104),
6100000100012930001
106
6100000100012930002
6100000100012940001
6100000100012940002
(3-33),(2-30)
6100000100012990001
(1-47),(4-122)
6100000100013000001
(107-123),(74-102)
6100000100013110001
6100000100013110002
(125-135)
6100000100013110003
(137-175),(104-166)
6100000100013110004
175
6100000100013110005
344049
(177-245),(168-214)
6100000100013110006
6100000100013220001
(20-999),(17-999)
6100000100013220002
6100000100013240001
(35-107),(36-114)
6100000100013240002
6100000100013350001
6100000100013350002
6100000100013450001
(17-95),(22-116)
6100000100013450002
6100000100013510001
(28-130),(27-107)
6100000100013510002
6100000100013690001
6100000100013690002
6100000100013690003
(36-990)
6100000100013690004
(2-44),
6100000100013730001
6100000100013730002
(43-151),(155-193),(10-30),(34-96)
6100000100013960001
(1-23),(27-39),(2-8)
6100000100013960002
(1-73),(2-92)
6100000100014030001
(75-99),(94-998)
6100000100014030002
6100000100014030003
6100000100014080001
(41-111),(44-124)
6100000100014080002
1-85
6100000100014110001
86-96,(97-107)
6100000100014110002
6100000100014210001
(25-999),(16-998)
6100000100014210002
6100000100014240001
6100000100014240002
6100000100014350001
(35-103),(36-108)
6100000100014350002
6100000100014400001
6100000100014400002
(29-999),(46-998)
6100000100014420001
(2-44),(1-25)
6100000100014420002
27,28
6100000100014420003
(1-37),(2-50)
6100000100014510001
(39-59),(52-72)
6100000100014510002
(61-999),(74-998)
6100000100014510003
(1-35),(2-66)
6100000100014600001
35/1,(37-999),(70-999)
6100000100014600002
(5-31),(2-56)
6100000100014620001
(33-85),(58-96)
6100000100014620002
(5-999),(8-999)
6100000100014630001
6100000100014630002
(1-289)
6100000100014640001
(291-999)
6100000100014640002
(2-246)
6100000100014640003
(248-990)
6100000100014640004
(1-85),(2-92)
6100000100014710001
(87-197),(94-206)
6100000100014710002
(47-73),(52-78)
6100000100014740001
6100000100014740002
6100000100014940001
6100000100014940002
(243-301),302-999
6100000100014950001
(106-118),(73-81)
6100000100014950002
6100000100014950003
(120-150),(87-109)
6100000100014950004
(152-300),(111-239)
6100000100014950005
(49-71),(48-104)
6100000100014950006
6100000100015110001
(176-232),(183-259)
6100000100015110002
(25-123),(18-120)
6100000100015110003
6100000100015110004
(125-177),(122-174)
6100000100015110005
6100000100015220001
(21-85),(18-62)
6100000100015220002
(87-103),(111-119),125,127,64,(68-72)
6100000100015220003
(9-999),(6-190)
6100000100015340001
6100000100015340002
344016
(9-115),(6-122)
6100000100015490001
(117-999),(124-999)
6100000100015490002
(23-45)
6100000100015530001
6100000100015530002
(83-127)
6100000100015530003
(1-21),
6100000100015530004
6100000100015570001
(109-127),(176-224)
6100000100015570002
(147-205),(298-346)
6100000100015570003
(207-999),(348-998)
6100000100015570004
(129-139),(226-268)
6100000100015570005
6100000100015570006
(37-107),(68-174)
6100000100015570007
6100000100015660001
(17-31),(6-12)
6100000100015660002
(99-179),(82-150)
6100000100015660003
(33-95),(14-72)
6100000100015660004
6100000100015730001
(70-80),(85-93)
6100000100015730002
(1-999),(30-34)
6100000100015840001
(8-10),(16-28)
6100000100015840002
(1-29),(6-44)
6100000100015940001
(31-127),(46-130)
6100000100015940002
(3-29),(2-26)
6100000100016010001
(31-91),(28-86)
6100000100016010002
(1-29),4
6100000100016050001
(33-87),(8-52)
6100000100016050002
6100000100016070001
6100000100016130001
6100000100016130002
3,(2-20)
6100000100016160001
(13-105),(22-100)
6100000100016160002
(1-35),(2-16)
6100000100016210001
(66-80),(73-89)
6100000100016210002
1-4,(6-40)
6100000100016260001
6100000100016320001
6100000100016320002
6100000100016320003
(46-990)
6100000100016320004
(14-28),(21-49)
6100000100016390001
(30-54),(66-150),(51-73),(91-167)
6100000100016390002
(56-64),(75-89)
6100000100016390003
6100000100016410001
60401000000
44-61,63
6100000100016410002
(1-35),(2-32),36,62
6100000100016460001
(53-97),(44-54),56,107
6100000100016460002
(109-139),(70-86)
6100000100016460003
(2-66),(1-61)
6100000100016480001
(70-999),(65-999)
6100000100016480002
11-20
6100000100016540001
(1-23),(27-29),(2-999)
6100000100016550001
(73-133)
6100000100016550002
28-40
6100000100016620001
(1-109),(2-84)
6100000100016710001
(111-117),(86-96)
6100000100016710002
(156-288),(217-341)
6100000100016710003
(119-159),(98-132)
6100000100016710004
(1-131),(2-184)
6100000100016910001
(133-141),(186-198)
6100000100016910002
(143-999),(200-998)
6100000100016910003
6100000100016970001
(46-999),(41-999)
6100000100016970002
6100000100017160001
(24-102)
6100000100017160002
6100000100017160003
6100000100017160004
(1-169),(2-202)
6100000100017210001
(171-241),(204-224)
6100000100017210002
(288-346),(313-363)
6100000100017210003
(243-281),(226-254)
6100000100017210004
6100000100017280001
(1-69),(4-26),(30-36),(40-62)
6100000100017320001
(71-109),(82-98)
6100000100017320002
6100000100017410001
(33-93),(38-100)
6100000100017410002
(1-19),(2-38)
6100000100017510001
(71-85),(100-112)
6100000100017510002
(21-69),(40-98)
6100000100017510003
1,15,(27-91),(12-44)
6100000100017550001
6100000100017550002
(95-97),(46-54)
6100000100017550003
6100000100017600001
6100000100017600002
6100000100017600003
6100000100017600004
6100000100017620001
(1-27),(2-58)
6100000100017620002
(129-175)
6100000100017620003
(258-266)
6100000100017620004
344066
(191-211),268/1,(272-304),308,316
6100000100017620005
344009
6100000100017620006
(60-116)
6100000100017620007
(118-250)
6100000100017620008
(17-999),(12-999)
6100000100017920001
6100000100017920002
6100000100017990001
(1-25),2,4,(8-36)
6100000100018580001
(27-33)
6100000100018580003
91-999,(30-90)
6100000100018590001
(2-28),(1-83)
6100000100018590002
6100000100018660001
(105-115),(92-110)
6100000100018660002
(240-999)
6100000100018660003
112
6100000100018660004
344050
(117-153),(114-160)
6100000100018660005
(155-221),162,(166-238)
6100000100018660006
164
6100000100018660007
344021
(43-103),(50-90)
6100000100018660008
(1-97),(2-100)
6100000100018670001
(99-999),(102-998)
6100000100018670002
(3-35)
6100000400000010001
347370
6174
6143
60412000000
6100000400000010002
347381
(37-73),(38-76)
6100000400000370001
6100000400000370002
347374
(38-76),(39-73)
6100000400000390001
347360
6100000400000390002
6100000400000440001
347383
6100000400000440002
347387
3,(6-26)
6100000400000460001
347380
6100000400000460002
347382
6100000400000460003
347375
(38-76),(37-73)
6100000400000470001
6100000400000470002
(15-19)
6100000400000500001
(28-34)
6100000400000500002
347389
6100000400000500003
(1-67),(38-76)
6100000400000550001
6100000400000550002
6100000400000570001
(28-48)
6100000400000570002
(50-70)
6100000400000570003
6100000400000600001
6100000400000600002
347386
6100000400000600003
(73-999)
6100000400000600004
(37-999),(38-999)
6100000400000700001
6100000400000700002
6100000400000710001
347366
6100000400000710002
(37-999),(40-999)
6100000400000850001
(1-35),(4-38)
6100000400000850002
6100000400001040001
6100000400001040002
6100000400002420001
(53-999),(2-999)
6100000400002420002
6100000400002480001
(59-999),(2-999)
6100000400002480002
(2-64),(1-23)
6100000400002520001
(66-999),(25-999)
6100000400002520002
6100000400002530001
(2-888)
6100000400002530002
6100001100000020001
347904
6154
60437000000
(13-99),(8-96)
6100001100000020002
347935
(101-999),(98-200)
6100001100000020003
347923
(1-89),(2-76)
6100001100000030001
(91-199),(78-200)
6100001100000030002
6100001100000040001
(13-81),(14-78)
6100001100000040002
347930
(83-199),(80-200)
6100001100000040003
6100001100000060001
(15-81),(16-82)
6100001100000060002
(83-199),(84-200)
6100001100000060003
6100001100000070001
(17-79),(16-82)
6100001100000070002
(81-199),(84-200)
6100001100000070003
6100001100000080001
(15-79),(16-82)
6100001100000080002
6100001100000080003
347902
6100001100000090001
(15-83),(16-100)
6100001100000090002
(85-199),(102-200)
6100001100000090003
6100001100000100001
(17-101),(16-102)
6100001100000100002
(103-199),(104-200)
6100001100000100003
(3-25),(2-24)
6100001100000110001
(115-249),(118-250)
6100001100000110002
(27-113),(26-116)
6100001100000110003
6100001100000120001
(25-113),(28-120)
6100001100000120002
(115-249),(124-250)
6100001100000120003
6100001100000160001
(115-249),(112-250)
6100001100000160002
(129-301),(80-300)
6100001100000300001
347917
(51-127),(2-78)
6100001100000300002
347942
6100001100000330001
(7-77),(8-88)
6100001100000330002
(79-91),(90-106)
6100001100000330003
(1-73),(2-78)
6100001100000350001
(75-301),(80-300)
6100001100000350002
6100001100000360001
(17-95),(12-96)
6100001100000360002
(97-301),(98-300)
6100001100000360003
6100001100000400001
347910
(5-15),(4-12)
6100001100000400002
(17-99),(14-100)
6100001100000400003
347905
(1-29),(2-38)
6100001100000610001
(31-201),(40-200)
6100001100000610002
(1-11),(2-28)
6100001100000840002
(13-101),(30-64)
6100001100000840003
347913
6100001100000930001
347927
(23-101),(14-76)
6100001100000930002
347932
(103-301),(78-300)
6100001100000930003
6100001100001000001
(29-201),(18-200)
6100001100001000002
(1-15),(2-30)
6100001100001020001
(40-200)
6100001100001020002
(17-201),(32-38)
6100001100001020003
6100001100001100001
347909
(101-201),(98-200)
6100001100001100002
347924
(7-39)
6100001100001120001
6100001100001120002
(41-201),(2-200)
6100001100001120003
(27-201),(12-22)
6100001100001130001
6100001100001130002
6100001100001210001
347900
(41-301),(36-300)
6100001100001210002
(1-57),(2-52)
6100001100001240001
347922
(59-201),(54-200)
6100001100001240002
6100001100001300001
(37-141),(38-142)
6100001100001300002
(143-165),(144-154)
6100001100001300003
347931
(156-200),(167-193)
6100001100001300004
6100001100001430001
(15-201),(24-200)
6100001100001430002
(24-44)
6100001100001600001
6100001100001600002
347936
6100001100001640001
(27-129),(24-132)
6100001100001640002
(131-225),(134-252)
6100001100001640003
(227-235),(254-262)
6100001100001640004
(237-251),(264-278)
6100001100001640005
(1-59),(2-52)
6100001100001670001
(61-129),(54-108)
6100001100001670002
6100001100001710001
(21-85),(24-82)
6100001100001710002
(87-251),(84-250)
6100001100001710003
6100001100002030001
(33-201),(18-200)
6100001100002030002
(1-89),(2-84)
6100001100002120001
(91-201),(86-200)
6100001100002120002
6100001100002170001
(11-201),(18-200)
6100001100002170002
6100001100002250001
(69-201),(60-200)
6100001100002250002
(1-23),(2-30)
6100001100002270001
(25-201),(32-200)
6100001100002270002
(1-83),(2-88)
6100001100002490001
(85-165),(90-142)
6100001100002490004
(41-61),(40-200)
6100001100002510001
6100001100002510002
347939
(25-43),(34-110)
6100001100002520001
(51-65),(112-300)
6100001100002520002
6100001100002540001
(37-107),(46-104)
6100001100002540002
(109-171),(106-170)
6100001100002540003
(175-301),(172-300)
6100001100002540004
(1-99),(2-44)
6100001100002630001
(101-169),(46-70)
6100001100002630002
(171-255),(72-118)
6100001100002630003
(1-43),(2-100)
6100001100002640001
(45-69),(102-168)
6100001100002640002
(71-113),(170-300)
6100001100002640003
(1-117),(2-50)
6100001100002650001
(119-301),(54-300)
6100001100002650002
(1-51),(2-118)
6100001100002660001
(53-301),(120-300)
6100001100002660002
(53-127),(52-98)
6100001100002670001
(129-301),(100-300)
6100001100002670002
(101-301),(128-300)
6100001100002680001
(51-99),(52-126)
6100001100002680002
6100001100002710001
(85-301),(102-300)
6100001100002710002
(1-99),(2-100)
6100001100002720001
(101-301),(102-238)
6100001100002720002
(1-115),(50-126)
6100001100002730001
(117-301),(128-300)
6100001100002730002
(1-49),(2-26)
6100001100002780001
(57-69),(28-44)
6100001100002780002
(71-301),(46-300)
6100001100002780003
6100001100002790001
(23-59),(26-78)
6100001100002790002
(73-143),(80-158)
6100001100002790003
347916
(171-301),(160-300)
6100001100002790004
6100001100002820001
(29-301),(40-300)
6100001100002820002
6100001100002890001
35,38
6100001100002890002
6100001100003160001
6100001100003160002
(1-55),(2-60)
6100001100003180001
(79-301),(66-300)
6100001100003180002
6100001100003240001
(79-301),(80-300)
6100001100003240002
(3-87),(18-68)
6100001100003310001
(115-301),(118-300)
6100001100003310002
1 ,1¡,1¢,3,4,15,17
6100001100003340001
1,5/1,7,9,4/1,4/2,4/3,11,21,6,8
6100001100003340002
6100001100003340003
6100001100003360001
(11-101)
6100001100003360002
6100001100003370001
(32-200)
6100001100003370002
(17-101),(2-48)
6100001100003480001
(103-301),(50-300)
6100001100003480002
(1-9),2 ,2¡,2¢,2£
6100001100003630001
(11-301),(4-300)
6100001100003630002
6100001100003640001
(41-301),(44-300)
6100001100003640002
6100001100003650001
6100001100003650002
6100001100003660001
6100001100003660002
6100001100003670001
(29-301),(34-300)
6100001100003670002
6100001100003750001
6100001100003750002
(25-89),(2-300)
6100001100003750003
(3-301),(4-18)
6100001100003760001
(20-70)
6100001100003760002
6100001100003760003
(3-39),(4-34)
6100001100003770001
6100001100003770002
(1-39),(2-48)
6100001100003790001
(50-300)
6100001100003790002
6100001100003850001
6100001100003850002
(31-111),(30-52)
6100001100003850003
(113-145),(54-84)
6100001100003850004
(147-301),(86-300)
6100001100003850005
6100001100003910001
(27-89),(30-92)
6100001100003910002
(91-103),(94-134)
6100001100003910003
(105-301),(136-300)
6100001100003910004
3/2,15,17,19,(28-42)
6100001100003950001
58/1,(60-62)
6100001100003950002
6100001100004030001
(13-27),(14-28)
6100001100004030002
6100001100004160001
(23-301),(24-300)
6100001100004160002
6100001100004210001
6100001100004210002
6100001100004230001
(27-301),(34-300)
6100001100004230002
6100001100004260001
(27-301),(24-300)
6100001100004260002
6100001100004290001
(23-111),(20-88)
6100001100004290002
(113-231),(90-200)
6100001100004290003
(233-297),(202-248)
6100001100004290004
(299-401),(250-400)
6100001100004290005
(1-19),(2-40)
6100001100004700001
(21-89),(42-98)
6100001100004700002
(91-163),(100-170)
6100001100004700003
(172-206)
6100001100004700004
(165-301),(208-238)
6100001100004700005
6100001100004710001
(19-75),(22-98)
6100001100004710002
(77-87)
6100001100004710003
100
6100001100004710004
6100001100004780001
2,3,4
6100001100004780002
6100001100004830001
(19-35),(10-60)
6100001100004830002
(137-301),(62-300)
6100001100004830003
(2-21)
6100001100004850001
(23-59),(52-62)
6100001100004850002
6100001100004850003
6100001100004880001
(7-301),(2-148)
6100001100004880002
(150-300)
6100001100004880003
6100001100005040001
(39-301),(40-300)
6100001100005040002
6100001100005080001
6100001100005080002
(15-21),(30-36)
6100001100005080003
(1-5),(2-18)
6100001100005160001
(7-301),(20-300)
6100001100005160002
6100001100005170001
6100001100005170002
(57-63),(18-40)
6100001100005170003
(65-109)
6100001100005170004
(111-301),(52-60)
6100001100005170005
6100001100005190001
(21-301),(16-300)
6100001100005190002
6100001100005300001
(47-301),(52-72)
6100001100005300002
6100001100005320001
(5-73),(2-80)
6100001100005320002
(75-81),(82-174)
6100001100005320003
(83-95),(176-300)
6100001100005320004
(17-31),(6-22)
6100001100005470001
(33-41),(24-34)
6100001100005470002
6100001100005490001
(27-301),(28-300)
6100001100005490002
(1-57),(4-54)
6100001100005520001
(59-73),(56-92)
6100001100005520002
(79-105),(96-102)
6100001100005520003
(109-153),(106-122)
6100001100005520004
(155-225),(124-184)
6100001100005520005
(227-285),(186-268)
6100001100005520006
(287-315)
6100001100005520007
(270-318)
6100001100005520008
(331-401),(320-400)
6100001100005520009
6100001100005570001
(73-203),(60-210)
6100001100005570002
6100001100002830001
7 ,8 
6100001100002830002
6100001100005680001
(83-301),(82-300)
6100001100005680002
6100001100005770001
(9-149),(14-142)
6100001100005770002
(151-301),(144-300)
6100001100005770003
(1-69),(2-74)
6100001100005780001
(71-79)
6100001100005780002
(81-95)
6100001100005780003
(97-129),(76-124)
6100001100005780004
(143-195),(150-218)
6100001100005780005
(197-301),(220-350)
6100001100005780006
6100001100005830001
(23-301),(22-300)
6100001100005830002
6100001100006060001
6100001100006060002
6100001200000580001
346518
6182
6155
60440000000
(43-57),(46-82)
6100001200000580002
346517
6100001200000630001
346503
(27-61),(28-68)
6100001200000630002
346523
(1-61),(2-72)
6100001200001350001
346513
(63-115),(74-114)
6100001200001350002
346530
6100001200001380001
(15-19),(18-36)
6100001200001380002
6100001200001410001
(33-45),(2-14)
6100001200001410002
346516
(1-139),(2-110)
6100001200001960001
346504
(141-357),(112-288)
6100001200001960002
(1-47),(2-36)
6100001200002000001
346512
(49-145),(38-122),47,36
6100001200002000002
6100001200002050001
346500
(65-999),(60-998)
6100001200002050002
346519
(1-39),(43-65)
6100001200002410001
(67-81),(2-114)
6100001200002410002
6100001200002410003
(116-138),2,4,6,8,1,3,5,7,7 
6100001200002410004
1,1
6100001200002750001
(5-53),(2-104)
6100001200002750002
6100001200002770001
33,35,46,(48-80)
6100001200002770002
(1-11),(2-44)
6100001200002840001
(13-213)
6100001200002840002
(46-182)
6100001200002840003
(184-212)
6100001200002840004
(1-31),(2-32),34,34
6100001200002930001
346510
31,(33-85),(34-90),89
6100001200002930002
346506
6100001200003010001
(37-127),(36-134)
6100001200003010002
6100001200003050001
(12-74)
6100001200003050002
6100001200003090001
6100001200003090002
(35-73),(42-106)
6100001200003090003
(87-123),(118-188),(141-155),135
6100001200003090004
6100001200003490001
(23-59),(28-74)
6100001200003490002
(1-57),(2-88),61,65
6100001200003700001
(69-95),(94-120)
6100001200003700002
(1-65),(2-74)
6100001200003760001
(67-107),(76-136)
6100001200003760002
(7-43),(4-56)
6100001200004000001
(45-123),(58-150)
6100001200004000002
6100001200004270001
6100001200004270002
(8-56),58,60,60 ,62 
6100001200004270003
(1-101),(2-92)
6100001200004420001
(105-109),(94-114)
6100001200004420002
(1-145),(2-134)
6100001200004630001
(147-279),(136-230)
6100001200004630002
6100001200004700001
23-85,7 ,2 ,2¡
6100001200004700002
6100001200004770001
(97-195),(96-216)
6100001200004770002
(1-59),(2-34)
6100001200005010001
(61-109),(36-68)
6100001200005010002
80-84
6100001200005160001
6100001200005160002
346528
(1-87),(2-58)
6100001200005460001
1,1,1,1
6100001200005460002
(1-117),(2-156)
6100001200005630001
(121-251),(158-340)
6100001200005630002
6100001200005650001
(39-71),(42-64)
6100001200005650002
40,42,48
6100001200005770001
(21-61),(18-38),8
6100001200005770002
6100001200005790001
(25-49),(14-28),12
6100001200005790002
(51-97),(30-56)
6100001200005790003
(23-109),(56-128),130
6100001200006060001
(130-202)
6100001200006060002
(113-161)
6100001200006060003
346524
(1-75),(2-50)
6100001200006100001
77,79,81,83
6100001200006100002
(9-13),(30-48)
6100001200006560001
(2-22),1
6100001200006560002
(1-223),(2-272)
6100001200006650001
(225-237),(274-298)
6100001200006650002
71,(72-82)
6100001200006680001
(1-21),(2-70)
6100001200006680002
6100001200006770001
346505
1,3,5-45
6100001200006770002
6100001200006920001
6100001200006920002
6100001200007070001
(3-29),(2-22)
6100001200007070002
(9-87),(2-40)
6100001200007110001
(89-163),(42-64)
6100001200007110002
(1-43),(2-34)
6100001200007130001
43,(44-57),(36-58)
6100001200007130002
85 ,(87-121),(80-120)
6100001200007280001
(1-85),(2-78)
6100001200007280002
(1-309),(2-292)
6100001200007390001
(294-334),(317-359)
6100001200007390002
6100001200007870001
31-39
6100001200007870002
(1-25),49
6100001200007940001
6100001200007940002
6100001200008120001
6100001200008120002
1,1,1,2,2,2,2,2
6100001200008120003
6100001200008250001
6100001200008250002
(1-75),(2-54)
6100001200008710001
(77-139),(58-132)
6100001200008710002
97¡,(99-187),(148-216)
6100001200008880001
(1-95),(2-146),97 ,97¢,97£,97¤,97¥,97¦
6100001200008880002
(1-33),(2-20)
6100001200008940001
(35-127),(22-94)
6100001200008940002
6100001200008970001
(21-33),(42-58)
6100001200008970002
(1-97),(2-88)
6100001200009070001
(99-183),(90-184),97 
6100001200009070002
(37-99)
6100001200009150001
(2-242),(1-35),(101-149),99¡,99¢,99£
6100001200009150002
6100001200009160001
(23-117),(28-92)
6100001200009160002
(1-127),(2-90)
6100001200009550001
(129-183),(92-138)
6100001200009550002
2,(6-22)
6100001300000030001
346787
6188
6140
60404000000
6100001300000030002
346783
6100001300000100001
346780
(170-214)
6100001300000100002
(65-171),(70-168)
6100001300000100003
6100001300000270001
(39-49),(42-50)
6100001300000270002
(1-63),(2-66)
6100001300000310001
(65-129),(68-126)
6100001300000310002
6100001300000350001
346789
6100001300000350002
(75-99),(70-90)
6100001300000390001
346782
6100001300000390002
(1-89),(32-48)
6100001300000450001
(10-30),(52-96)
6100001300000450002
346781
6100001300000460001
(55-73),(58-60)
6100001300000460002
6100001300000470001
(1-11),2
6100001300000470002
6100001300000490001
(59-91),(50-80)
6100001300000490002
6100001300000530001
(25-101)
6100001300000530002
6100001300000550001
(19-31),(10-22)
6100001300000550002
(87-317),(74-298)
6100001300000580001
(1-85),(2-72)
6100001300000580002
(119-141),(102-108)
6100001300000620001
6100001300000620002
(3-79),(4-70)
6100001300000660001
(81-165),(72-106)
6100001300000660002
(45-55),(46-52)
6100001300000730001
6100001300000730002
(85-117),(90-110)
6100001300000750001
6100001300000750002
6100001300000750003
6100001300000760001
(21-49),(75-119),(4-12),(32-86),16
6100001300000760002
(73-115),(64-120)
6100001300000860001
(245-271),277,266
6100001300000860002
(1-69),(2-62)
6100001300000860003
(133-243),(242-264),124
6100001300000860004
(85-155),(96-164)
6100001300000870001
6100001300000870002
(279-305),(288-314)
6100001300000870003
(157-267),(178-286)
6100001300000870004
(71-187),(68-200)
6100001300000920001
6100001300000920002
(33-79),(68-160)
6100001300000950001
(1-31),(2-66)
6100001300000950002
6100001300001000001
(9-77),(6-100)
6100001300001000002
(43-83),(12-88)
6100001300001010001
(89-185),(90-190)
6100001300001010002
(3-7),(19-41),(2-10)
6100001300001010003
(3-19),(2-10),(14-20)
6100001300001040001
(35-109),(22-90)
6100001300001040002
(61-135),(72-132)
6100001300001070001
6100001300001070002
(141-269),(248-292)
6100001300001070003
(134-246)
6100001300001070004
(55-103)
6100001300001150001
6100001300001150002
(45-47)
6100001300001160001
6100001300001160002
(1-65),(2-28)
6100001300001180001
(34-86)
6100001300001180002
(48-50),49
6100001300001230001
(1-35),(2-46),48,48
6100001300001230002
(69-109),(60-96)
6100001300001330001
(115-225),(98-196)
6100001300001330002
6,24,27
6100001300001330003
(73-201),(70-200)
6100001300001440001
6100001300001440002
(73-161),(74-188)
6100001300001450001
(1-69),(2-72)
6100001300001450002
6100001300001550001
6100001300001550002
(3-13),(2-8)
6100001300001600001
(17-109),(20-82)
6100001300001600002
(89-153),(96-146)
6100001300001620001
(265-291),(282-306)
6100001300001620002
(1-75),(2-82)
6100001300001620003
(165-263),(164-280)
6100001300001620004
(19-49),(2-8),(24-48)
6100001300001660001
(10-20),7
6100001300001660002
(67-151),(88-154)
6100001300001670001
(1-65),(2-86)
6100001300001670002
6200000100000280001
390027
6230
61401000000
6200000100000290001
(4-10),23,25,27,(20-32)
6200000100000290002
390037
(3-15),(2-14)
6200000100000320001
(16-102),(17-127)
6200000100000320002
6200000100000340001
390035
6234
61401365000
(2-8),27
6200000100000340002
6200000100000460001
390029
15-56
6200000100000460002
390026
6200000100000540001
390005
9-13,17,(23-45)
6200000100000540002
(14-20),(34-40),48-54
6200000100000540003
63,65
6200000100000610001
(61-75),(81-87)
6200000100000610002
(4-70)
6200000100000610003
(9-59)
6200000100000610005
(4-998),
6200000100000670001
390025
6200000100000670002
6200000100000770001
390046
6200000100000770002
390023
(46-999),(27-999)
6200000100000770003
390000
(2-24),(1-27)
6200000100000780001
(31-47),(26-30)
6200000100000780002
2-7,9,11-999
6200000100000810001
390006
1,(8-10)
6200000100000810002
2/4,1,3,5
6200000100000840001
390042
6229
61401370000
(4-998),(7-999)
6200000100000840002
390010
6200000100000950001
390013
15-199
6200000100000950002
(49-71)
6200000100001200002
6200000100001200003
58,60
6200000100001240001
2-57,59,61-199
6200000100001240002
24-99
6200000100001360001
390048
6200000100001360002
(46-560),(51-65)
6200000100001510001
(2-22),(1-49)
6200000100001510002
61401380000
34 ,(36-44),67
6200000100001510003
6200000100001510004
13,15
6200000100001700001
390011
6200000100001700002
1,3-199
6200000100001880001
6200000100001880002
6200000100002090001
6200000100002090002
390047
(1-19),(4-34)
6200000100002130001
(21-999),(40-999)
6200000100002130002
11-15
6200000100002180001
16-999,1-10
6200000100002180002
67,77,79,87
6200000100002270001
88,89
6200000100002270002
(3-49),(2-44)
6200000100002270003
(51-65),(46-86),94
6200000100002270004
6200000100002550001
6200000100002550002
6200000100002560001
(3-7),20-46
6200000100002560002
6200000100002630001
(15-45),(14-42)
6200000100002630002
44,46-999
6200000100002630003
6200000100003010001
33,35-63,29,31
6200000100003010002
390044
67-999
6200000100003010003
390020
1,4-999
6200000100003090001
6200000100003090002
6200000100003230001
6200000100003230002
6200000100003230003
6200000100003270001
6200000100003270002
6200000100003280001
6200000100003280002
(28-999),(23-999)
6200000100003360001
(22-26),1-21
6200000100003360002
128-998,(103-111)
6200000100003680001
(1-51),(2-46)
6200000100003680002
48/77,(53-61),(58-126),(71-101)
6200000100003680003
(44-998),(27-999)
6200000100003790001
(2-42),(1-25)
6200000100003790002
30,32,34
6200000100004050001
,(4-28)
6200000100004050002
(1-69),(2-32)
6200000100004060001
(34-998),(71-999)
6200000100004060002
(5-199)
6200000100004280001
6200000100004280002
(8-200)
6200000100004280003
6200000100004280004
12-37,8
6200000100004360001
6200000100004360002
(3-21),(4-14)
6200000100004370001
6200000100004370002
6200000100004620001
(77-95),(66-92)
6200000100004620002
(46-64),(53-75)
6200000100004620003
6200000100004950001
(23-999),(18-998)
6200000100004950002
390039
11/57,78/13,30,34,25,49,82-116,59-71
6200000100005010001
(4-22),(11-19)
6200000100005010002
(3-49),(4-30)
6200000100005130001
(32-998),(51-999)
6200000100005130002
6200000100005150001
6200000100005150002
1,(2-34)
6200000100005170001
6200000100005170002
12-200
6200000100005190001
6200000100005190002
4/59,(1-11)
6200000100005380001
(6-999),(17-999)
6200000100005380002
6200000100005400001
6200000100005400002
16,(18-998),(23-31)
6200000100005470001
6200000100005470002
6200000100005710001
1-53,55-999
6200000100005710002
6200000100005750001
6200000100005750002
1-12,(14-32),(13-49)
6200000100005800001
(51-999),(34-999)
6200000100005800002
(2-998),(5-31)
6200000100005980001
6200000100005980002
6200000100006000001
6200000100006000002
6200000100006010001
6200000100006010002
(24-50),(37-67)
6200500100000020001
391302
6226
61405000000
(2-22),(1-35)
6200500100000020002
391300
(2-22),(1-25)
6200500100000050001
29,30,32
6200500100000050002
(14-88),(9-85)
6200500100000070001
(2-10),3,5
6200500100000070002
(14-124)
6200500100000120001
391308
(2-10),1,(19-147)
6200500100000120002
(6-66),(23-55)
6200500100000130001
2,4,(5-17)
6200500100000130002
26,(1-11)
6200500100000140001
(24-46),(29-71)
6200500100000250001
6200500100000250002
6200500100000340001
391301
(2-14),(1-23)
6200500100000340002
6200500100000350001
6200500100000350002
(32-76),(17-49)
6200500100000370001
6200500100000370002
6200500100000380001
(2-16),(1-11),15,17
6200500100000380002
(55-63),(56-72)
6200500100000510001
(2-54),(1-53)
6200500100000510002
(80-116),(79-115)
6200500100000530001
(2-78),(1-77)
6200500100000530002
(2-38),(1-41)
6200500100000550001
6200500100000650001
6200500100000650002
(4-42),(7-53)
6200500100000810001
6200500100000810002
(3-21),12
6200500100001020001
4,6,10,11
6200500100001020002
(2-20),9
6200500100001130001
13,15,38,40,42
6200500100001130002
(40-104),(27-35)
6200500100001140001
(2-38),(1-25)
6200500100001140002
(18-36),(21-37)
6300000300000030001
446200
6330
36413000000
6300000300000030002
446205
6300000300000070001
446218
(2-52),(1-51)
6300000300000070002
446213
(8-28)
6300000300000130001
446201
6300000300000130002
(16-24),(3-15)
6300000300000170001
446208
(26-28)
6300000300000170002
6300000300000200001
6300000300000200002
(2-16),3
6300000300000240001
16 ,(18-34),(9-29)
6300000300000240002
446206
(36-58),(33-49)
6300000300000240003
6300000300000270001
(54-90),(53-91)
6300000300000270002
6300000300000360001
(2-80),37,53,133
6300000300000360002
6300000300000520001
12,(5-13)
6300000300000520002
(52-96),(13-95)
6300000300000560001
(2-8),(3-11)
6300000300000570001
(2-10),(9-15)
6300000300000590001
(2-14),9
6300000300000630001
446209
6300000300000630002
6300000300000670001
(12-22),(15-21)
6300000300000760001
4,(3-9)
6300000300000760002
(4-14),(1-3)
6300000300000790001
(16-32),(17-37)
6300000300000790002
(2-6),10,(3-7)
6300000300000840001
6300000300000840002
6300000300000950001
6300000300000950002
(2-24),(1-3)
6300000300000960001
(28-40),(5-29)
6300000300000960002
(48-52),(31-47)
6300000300000960003
6300000300001190001
6300000300001240001
(2-24),(3-15)
6300000300001240002
(20-24),(15-37)
6300000300001320001
(6-14),5
6300000300001360001
6300000300001360002
(43-157)
6300000100000010002
443016
6319
36401386000
(164-166),(161-191)
6300000100000010003
443081
(16-56),(1-33)
6300000100000010004
443066
6318
36401392000
6300000100000010005
443083
(2-10),1,5,7
6300000100000010006
443022
(70-138)
6300000100000010007
443090
6300000100000010008
6300000100000010009
443063
201
6300000100000010010
443011
6316
36401385000
(182-188),(192-196),(221-227)
6300000100000010011
443029
(12-60)
6300000100000030001
443017
6311
36401364000
(68-72),(86-90)
6300000100000030002
443070
(92-112)
6300000100000030003
443069
6300000100000030004
443079
(120-160)
6300000100000030005
443045
6300000100000030006
6300000100000030007
(57-61),(93-107)
6300000100000030008
443076
6300000100000030009
443074
(133-157)
6300000100000030010
443067
(161-201)
6300000100000030011
(213-221)
6300000100000030012
443080
6300000100000050001
443058
18,(38-50),(74-90)
6300000100000050002
(92-164)
6300000100000050003
6300000100000050004
443008
6300000100000050005
6300000100000050006
(139-165)
6300000100000050007
3,7
6300000100000060002
(51-59)
6300000100000060003
61,(79-101)
6300000100000060004
6300000100000060005
(26-44)
6300000100000060006
6300000100000060007
6300000100000090001
(12-54)
6300000100000090002
(1-13),(29-47)
6300000100000100001
6300000100000100002
(44-126)
6300000100000100003
(53-85)
6300000100000100004
(87-127)
6300000100000100005
443117
6300000100000110001
8,(5-9)
6300000100000110002
(4-28),(39-45)
6300000100000110003
(14-20),(11-17)
6300000100000160001
4,12,(1-9)
6300000100000160002
(2-26),3,5,23
6300000100000230001
(28-30),(23-27)
6300000100000230002
6300000100000240001
(22-142),15,(25-95)
6300000100000240002
(144-160),(97-131)
6300000100000240003
443023
6300000100000280001
(34-78),(33-59)
6300000100000280002
(80-88),(79-97)
6300000100000280003
(39-47),73
6300000100000310003
(75-99),(38-144)
6300000100000310004
443052
(22-52),(27-51)
6300000100000360001
6300000100000360002
130,132
6300000100000380001
443105
6312
36401368000
(72-76),(75-93)
6300000100000380002
(40-70),(13-25),(55-71)
6300000100000380003
(94-126),(95-115)
6300000100000380004
443009
6300000100000380005
(117-121)
6300000100000380006
443034
6,10,(14-22),(5-17)
6300000100000410001
6300000100000410002
12,14,18,20
6300000100000420002
6300000100000420003
6300000100000510001
443101
6317
6314
36401378000
(4-16),(7-15)
6300000100000510002
443065
(2-26),(3-27)
6300000100000520001
(112-144),150,157,159,165
6300000100000520002
(56-108),(81-135)
6300000100000520003
6300000100000550001
6300000100000550002
24,26,32,(11-19),(21-45)
6300000100000570001
(2-8),(5-7)
6300000100000570002
6300000100000570003
6300000100000590001
(2-18),24
6300000100000590002
2,2,2,2,34,34
6300000100000600001
(2-54),(1-43),65,67
6300000100000650001
(69-79)
6300000100000650002
6300000100000650003
(203-231),(245-257),198,200
6300000100000670002
161,(163-201),(233-243),(190-192)
6300000100000670003
(248-258),140
6300000100000670004
(452-516)
6300000100000670005
443106
472,(453-499)
6300000100000670006
443098
(1-63),161
6300000100000670007
443082
6300000100000670008
443030
(22-30),63/1
6300000100000670009
443013
6315
36401383000
(332-360)
6300000100000670010
443087
(302-330),(279-333)
6300000100000670011
(364-450),447
6300000100000670012
443091
(24-46),5,(15-19)
6300000100000740001
2,(10-20)
6300000100000740002
6300000100000740003
6300000100000850001
(100-124),(119-137)
6300000100000850002
153,157,161,165,169
6300000100000940001
(69-151),155,155
6300000100000940002
(2-48),(1-37)
6300000100000940003
443093
24,26,28,30,32,34,36,38
6300000100000940004
(56-144)
6300000100000940005
(39-67)
6300000100000940006
40,42,44,(52-54)
6300000100000940007
(2-56),(1-49)
6300000100000950001
(62-138)
6300000100000950002
18,(186-216),(563-749)
6300000100000960001
443036
4,(32-176),5,(9-167)
6300000100000960002
218-436
6300000100000960003
6300000100000970001
443111
187,191
6300000100000970002
4,6,(1-29)
6300000100000970003
(160-162),(247-269)
6300000100000970004
443125
172,176,(271-279)
6300000100000970005
(26-62)
6300000100000970006
(78-100),(59-167)
6300000100000970007
(193-231)
6300000100000970008
443084
(104-126)
6300000100000970009
6300000100000970010
(11-35),143,143,(90-152)
6300000100001030001
(162-210),(163-187)
6300000100001030002
(214-246)
6300000100001030003
(38-82),94
6300000100001030004
18,(20-68),(15-71)
6300000100001050001
3,5,6,7,8,14,18
6300000100001050002
(70-130),(73-147)
6300000100001050003
(149-151)
6300000100001050004
(2-22),(1-13),(69-81)
6300000100001080001
100-113
6300000100001080002
(76-92),(83-93)
6300000100001080003
(94-98),(95-99)
6300000100001080004
(121-151)
6300000100001080005
443092
(114-170)
6300000100001080006
443077
(120-160),(71-145)
6300000100001170001
(122-142),(127-157)
6300000100001200001
(299-319)
6300000100001200002
(2-120),(1-125)
6300000100001200003
(144-218),(159-261)
6300000100001200004
(240-300),(263-297)
6300000100001200005
(2-6),3,(15-23)
6300000100001310001
6300000100001310002
443028
6313
36401373000
1,2,3
6300000100001380001
(2-6),(12-22),(5-17),(67-85)
6300000100001380002
6300000100001380003
(88-108),(89-99)
6300000100001380004
(110-136),(101-121)
6300000100001380005
(180-192),(123-181)
6300000100001380006
(138-178)
6300000100001380007
(194-240),(183-229)
6300000100001380008
443051
(201-239),241-300
6300000100001440001
(2-50),(5-27)
6300000100001440002
56,(66-122)
6300000100001440003
(124-178),(125-171)
6300000100001440004
(81-93),(99-123)
6300000100001440005
181
6300000100001440006
(1-29),(10-16)
6300000100001480001
6300000100001480002
(30-38),(42-48)
6300000100001480003
(31-47),(51-59),(63-73)
6300000100001480004
(50-156),(75-161)
6300000100001480005
(26-52),(1-3)
6300000100001510001
(5-35)
6300000100001510002
54,39
6300000100001510003
(41-99),(74-124)
6300000100001510004
(126-152),200,(117-135)
6300000100001510005
443035
(222-240),(137-143),(153-189)
6300000100001510006
(2-76),(1-63)
6300000100001520001
(78-96),(65-89)
6300000100001520002
(54-92),(45-137)
6300000100001530001
(175-209),(229-257)
6300000100001530002
(96-110)
6300000100001530003
(114-126),(139-167)
6300000100001530004
(128-170)
6300000100001530005
443114
(267-287)
6300000100001530006
(172-232)
6300000100001530007
443095
(293-307)
6300000100001530008
6300000100001540001
(38-46),29,31
6300000100001540002
6300000100001560001
443004
6300000100001560002
(2-22),(1-3)
6300000100001610001
6300000100001610002
(12-50),(7-39)
6300000100001620001
6300000100001620002
39-53
6300000100001640001
6300000100001640002
55-63
6300000100001640003
6300000100001640004
6300000100001640005
(13-21),(78-94)
6300000100001670001
(1-11),(2-8),(72-76)
6300000100001670002
(23-41),(96-98)
6300000100001670003
(100-112),105,(113-115)
6300000100001670004
(114-140),146,(117-143),147
6300000100001670005
1,3,5
6300000100001680001
6300000100001680002
(20-50),(19-45)
6300000100001760001
(61-65)
6300000100001760002
(68-88),(85-109)
6300000100001860002
(26-60)
6300000100001860003
(2-20),(1-47)
6300000100001860004
6300000100001880001
(100-112)
6300000100001880002
(114-188),(516-532)
6300000100001880003
1,11,47,49,51,201
6300000100001880004
(190-226)
6300000100001880005
(32-36),1
6300000100001900001
(8-30)
6300000100001900002
12,14,(42-70)
6300000100001920001
443041
6300000100001920002
6300000100001930001
(167-171)
6300000100001930002
6300000100001940001
443020
6300000100001940002
(76-212)
6300000100001940003
443001
6300000100001940004
6300000100001940005
(107-171),175
6300000100001940006
(2-28),(3-27),35
6300000100002030001
(82-108),(83-129)
6300000100002030002
(97-231),(148-286)
6300000100002040001
(2-68),(1-19)
6300000100002040002
36401388000
(76-100),(21-25),47
6300000100002040003
(110-126),(79-95)
6300000100002040004
(140-146)
6300000100002040005
(2-8),(13-89)
6300000100002060001
(10-86),(91-117)
6300000100002060002
(88-148),(119-149)
6300000100002060003
6300000100002070001
(16-28)
6300000100002070002
6,3,85
6300000100002080001
2,4,(1-11)
6300000100002080002
6300000100002100001
443010
123
6300000100002100002
(22-86)
6300000100002100003
(88-118),(23-93)
6300000100002100004
(7-29),31
6300000100002110001
1,(18-46)
6300000100002110002
443096
(48-60),31,(33-45)
6300000100002110003
(122-142),(109-119),123
6300000100002140001
(30-120),(41-97)
6300000100002140002
(4-28),(1-7),(17-39)
6300000100002140003
6300000100002170001
(28-94),(27-93)
6300000100002170002
6300000100002340001
41,41,43,114,135,137
6300000100002340002
6300000100002340003
6300000100002370001
6300000100002370002
(24-52),(13-31)
6300000100002370003
(14-30),(1-9)
6300000100002400001
6300000100002400002
443047
6300000100002410001
(60-70)
6300000100002410002
6300000100002410003
(102-134),101,103
6300000100002410004
6300000100002510001
(5-11),28,30
6300000100002510002
(2-42),27
6300000100002550001
(62-116),(65-121)
6300000100002550002
(14-32),86,(17-39)
6300000100002620001
261
6300000100002620002
(154-218),251,(255-257)
6300000100002620003
(2-28),(1-45)
6300000100002690001
(95-105),(113-117)
6300000100002690002
(104-124),(119-129),(133-149)
6300000100002690003
(64-96)
6300000100002690004
(76-126),(71-107)
6300000100002720001
(2-72),(1-69)
6300000100002720002
443099
135
6300000100002810001
6300000100002810002
(14-76)
6300000100002810003
(77-97)
6300000100002810004
(99-131)
6300000100002810005
(2-68),(1-63)
6300000100002880001
(80-90)
6300000100002880002
2,6,8,44,51,53
6300000100002930001
50,(58-74),(71-91),97
6300000100002930002
22,(24-28),(19-29)
6300000100002960001
(4-22),(5-17),21
6300000100002960002
(76-116),(77-153)
6300000100003030001
(2-74),(1-75)
6300000100003030002
1/1,1/3,1,(3-25)
6300000100003110001
(6-66),31
6300000100003110002
(86-92),(33-35)
6300000100003110003
(18-26),(52-74),(43-53),(57-71)
6300000100003160001
(126-184),228,(137-169)
6300000100003160002
6300000100003300001
6300000100003300002
(4-10),9,11
6300000100003320001
13,15,17
6300000100003320002
51-78
6300000100003330001
6300000100003330002
6300000100003360001
(22-96),(19-103)
6300000100003360002
(94-108),(93-135)
6300000100003380001
(137-163),(138-160)
6300000100003380002
(2-58),(3-25),(75-91)
6300000100003380003
443086
6300000100003380004
(72-88)
6300000100003380005
(2-42),(3-9)
6300000100003400001
(46-48),27
6300000100003400002
6300000100003420001
(22-52),(13-57)
6300000100003420002
6300000100003440001
(112-164),(115-155)
6300000100003440002
12,(11-17)
6300000100003460002
19-20
6300000100003460003
(2-30),(1-21)
6300000100003510001
(68-126),(69-127)
6300000100003510002
(86-106)
6300000100003580001
77,79,83,85
6300000100003580002
(112-198),(135-161)
6300000100003580003
(89-133)
6300000100003580004
(204-210)
6300000100003580005
443122
(212-240)
6300000100003580006
443115
(14-28),(5-21)
6300000100003580007
(4-6),18
6300000100003610001
6300000100003610002
(22-58),(130-182)
6300000100003690001
1,3,(51-53),(157-221)
6300000100003690002
6300000100003690003
(222-226)
6300000100003690004
(227-253)
6300000100003690005
6300000100003710001
6300000100003710002
(2-58),(1-39)
6300000100003730001
(79-105)
6300000100003730002
6300000100003790001
(37-101)
6300000100003790002
6300000100003800001
(18-38),(39-59)
6300000100003800002
6300000100003800003
(42-70),(61-71)
6300000100003800004
2-26
6300000100003840001
27-48
6300000100003840002
66-70
6300000100003840003
(12-38),72,(1-35),89
6300000100003950001
(72-82)
6300000100003950002
(84-152)
6300000100003950003
(2-176),(1-141)
6300000100004000001
443050
(178-222),(143-191)
6300000100004000002
443044
(2-156)
6300000100004010001
(162-214)
6300000100004010002
6300000100004010003
(133-181)
6300000100004010004
6300000100004110001
(35-47)
6300000100004110002
(105-117),125/23
6300000100004240001
1,(3-69)
6300000100004240002
(84-106),(75-101)
6300000100004240003
4,(18-80)
6300000100004240004
112,114,118
6300000100004240005
443031
(130-168),(117-145)
6300000100004360001
(2-128),(1-115)
6300000100004360002
6300000100004380001
(18-60),(1-9),(37-47)
6300000100004380002
49,55,57,62,64
6300000100004380003
(2-44),(1-73)
6300000100004480001
(114-132),(75-169),179
6300000100004480002
443109
(50-68),82
6300000100004480003
6300000100004490001
(126-210),(127-181)
6300000100004490002
(4-16),(1-11)
6300000100004590001
(18-34),(17-23)
6300000100004590002
(36-50),(31-57)
6300000100004590003
(52-56),(60-74),(63-69),73
6300000100004590004
1-8,10,12,14,16,18,20,22,24,26
6300000100004610001
6300000100004610002
(72-144),63,65,67,(69-129)
6300000100004650001
(12-70),(1-61)
6300000100004650002
31,33
6300000100004710001
30,32,36,38
6300000100004710002
(2-138),(1-117)
6300000100004740001
(140-188),(119-167)
6300000100004740002
6300000100004790001
21-130,(132-220)
6300000100004790002
443904
(2-220),(1-129)
6300000100004800001
386
6300000100004800002
(222-336),348,360,303,383
6300000100004800003
(131-137)
6300000100004800004
6300000100004830001
(74-106),(79-115)
6300000100004830002
6300000100004840001
(6-154),(25-167)
6300000100004840002
6300000100004850001
6300000100004850002
6300000100004880001
(22-210),(19-239)
6300000100004880002
6300000100004900001
(26-30),(17-23)
6300000100004900002
(32-56),(31-65)
6300000100004900003
(58-72),67/148
6300000100004900004
(2-84),(1-51)
6300000100004910001
443903
(86-94)
6300000100004910002
(142-148),(176-194),(195-209)
6300000100004940002
(44-96),59
6300000100004940003
(100-140),(101-179)
6300000100004940004
(196-202)
6300000100004940005
(2-102),(1-91)
6300000100004980001
(104-134),(93-137)
6300000100004980002
(2-48),(1-69)
6300000100005100001
(56-76),(75-95)
6300000100005100002
(139-145)
6300000100005120001
(177-197)
6300000100005120002
346,350,350
6300000100005120003
(401-413)
6300000100005120004
(36-96)
6300000100005120005
(147-159)
6300000100005120006
(98-158),(199-255)
6300000100005120007
(301-399)
6300000100005120008
(28-34),(3-87),129
6300000100005120009
(2-26),1
6300000100005120010
(316-328)
6300000100005120011
(415-425)
6300000100005120012
257,261,(273-285),293,295
6300000100005120013
(161-175)
6300000100005120014
(160-288),302,304
6300000100005120015
(2-28),(46-76),(1-35)
6300000100005130001
(78-96),(75-93)
6300000100005130002
37,(57-73)
6300000100005130003
6300000100005140001
(136-154),(162-172),(129-157)
6300000100005140002
(53-123)
6300000100005140003
(159-177)
6300000100005140004
(2-10),(34-36),(19-27)
6300000100005160001
(72-94),(71-101)
6300000100005160002
40,(57-61)
6300000100005160003
(2-96),(1-77)
6300000100005210001
(79-123),(98-126)
6300000100005210002
6300000100005220001
17-30
6300000100005220002
31,33-47
6300000100005220003
48,50-54
6300000100005220004
(54-158),(47-107)
6300000100005240001
(2-52),(1-45)
6300000100005240002
(2-12),(3-11)
6300000100005270001
(32-76),(31-67)
6300000100005270002
(94-120),(69-125)
6300000100005270003
(2-162),(1-203)
6300000100005290001
(164-238),(205-273)
6300000100005290002
6300000100005360001
2,39
6300000100005360002
(53-75)
6300000100005360003
(42-88),(43-51)
6300000100005360004
(2-8),16,24,(1-7),(11-19)
6300000100005400001
(26-74),(23-39)
6300000100005400002
(2-164),(1-153)
6300000100005480001
(166-224),(155-219)
6300000100005480002
1-137
6300000100005520001
(142-206),(139-185)
6300000100005520002
(2-182),(1-179)
6300000100005540001
(184-242),(185-237)
6300000100005540002
(2-96),(3-99)
6300000100005550001
(102-158),(101-139)
6300000100005550002
160,(200-214),(143-157),(173-179)
6300000100005550003
(222-258),(181-189),197
6300000100005550004
(2-14),(3-15)
6300000100005580001
(18-30),(23-29)
6300000100005580002
(32-58),(31-53)
6300000100005580003
(60-68),(59-65)
6300000100005580004
(2-158),(1-145)
6300000100005590001
(160-192),(153-187)
6300000100005590002
(2-14),(1-11)
6300000100005610001
443012
6300000100005610002
443107
(1-117),(2-100)
6300000100005630001
(191-355),(176-292)
6300000100005630002
(102-174),(119-175)
6300000100005630004
18-25
6300000100005670001
(4-16),(5-17)
6300000100005670002
8,10,(5-15)
6300000100005730001
(18-40),(17-27)
6300000100005730002
(2-158),(1-57)
6300000100005890001
(160-198)
6300000100005890002
6300000100006310001
(2-16),1,(11-49),51
6300000100006310002
(2-6),(1-13)
6300000100006360001
(12-18),(28-34),(19-25),37
6300000100006360002
(19-67),101
6300000100006560001
(62-82)
6300000100006560002
(8-56),(1-17)
6300000100006560003
6300000100006770001
(86-108),(65-101)
6300000100006770002
443061
6300000100006840001
6300000100006840002
34,(1-87)
6300000100006900001
(38-126),(89-219)
6300000100006900002
233
6300000100006900003
443085
6300000100006910001
(2-6),18,20,(22-38),1,5,35
6300000100006910002
6300000100006920001
(16-28),(15-23)
6300000100006920002
132,(150-154),(191-279)
6300000100007080001
443100
(9-55)
6300000100007080002
(102-130),(143-171),(175-189)
6300000100007080003
6300000100007080004
(48-72),(57-71)
6300000100007080005
(4-8),(1-17)
6300000100007090001
(10-22),(21-27)
6300000100007090002
90,105
6300000100007090003
(4-114),(1-51),(55-117)
6300000100007100001
(118-130),(135-157)
6300000100007100002
(6-116),(1-75)
6300000100007120001
(122-168),(77-157)
6300000100007120002
(184-244),(248-298),(302-332)
6300000100007120003
(159-305)
6300000100007120004
(24-82),(21-85)
6300000100007130001
6300000100007130002
443071
(89-97)
6300000100007130003
(12-20),(15-19)
6300000100007130004
(118-124),(125-141)
6300000100007140001
443056
(126-190),(143-193)
6300000100007140002
6300000100007140003
(52-78),98,17,(21-27)
6300000100007140004
443110
6300000100007140005
19,21
6300000100007140006
(98-116),118
6300000100007140007
443068
210
6300000100007150001
443006
(216-244),(187-219)
6300000100007150002
(1-99),(2-122)
6300000100007150003
(124-192),(101-123)
6300000100007150004
(194-204),(131-167)
6300000100007150005
(143-163)
6300000100007160001
(165-187)
6300000100007160002
6300000100007160003
(234-266)
6300000100007160004
(272-278)
6300000100007160005
(284-322)
6300000100007160006
,,,,,,,(1-13),15,17
6300000100007160007
(81-139)
6300000100007160008
(22-40),(50-102)
6300000100007160009
(21-55)
6300000100007160010
(106-110),(120-128),230
6300000100007160011
6300000100007160012
(2-34),1,(126-132)
6300000100007190001
(134-144),39,41
6300000100007190002
6300000100007190003
6300000100007200001
(80-88)
6300000100007200002
(15-73)
6300000100007200003
(5-9)
6300000100007200004
6300000100007210001
6,10,36,(11-49)
6300000100007210002
(2-48),(1-99)
6300000100007230001
6300000100007230002
(101-173)
6300000100007230003
(150-188),(175-269)
6300000100007230004
(190-270)
6300000100007230005
6300000100007240001
3,(2-12),(5-15)
6300000100007240002
6300000100007250001
6300000100007250002
(8-60),(19-77)
6300000100007250003
(62-68),(79-101)
6300000100007250005
(2-116),(1-141)
6300000100007260001
(118-146),(143-179)
6300000100007260002
(6-148),(3-151)
6300000100007270001
(150-234),(153-221)
6300000100007270002
227
6300000100007270003
(89-91),98,100
6300000100007280001
(32-90),(35-87)
6300000100007280002
(16-28),(17-27)
6300000100007280003
36,37,38,45,59
6300000100007440001
6,(26-34),(9-31)
6300000100007440002
(15-55)
6300000100007480001
(2-98),(1-5)
6300000100007480002
6,(30-50),(62-76),(25-137)
6300000100007550001
(78-104),(141-149),165
6300000100007550002
2,2
6300000100007620001
6300000100007620002
23,31,33
6300000100007630001
4,10
6300000100007630002
6300000100007630003
(8-28),(3-7)
6300000100007640001
(34-62)
6300000100007640002
(14-26),(40-44),(21-49)
6300000100007700001
(4-12),(1-19)
6300000100007700002
(14-44),(5-35)
6300000100007730001
(2-12),1,3
6300000100007730002
(315-317),(321-385)
6300000100007730003
(161-181),199
6300000100007730004
(160-164),(203-313)
6300000100007730005
(104-158),(139-159)
6300000100007730006
(174-236),(244-250),(256-258)
6300000100007730007
260
6300000100007730008
6300000100007740001
6300000100007740002
(2-20),(3-17)
6300000100007760001
(28-68),(25-35)
6300000100007760002
(233-289)
6300000100007810001
(2-64),(68-534),31,35
6300000100007810002
(18-24),(21-29),1
6300000100007850001
26,30,32
6300000100007850002
6300000100007870001
(22-28),(19-27)
6300000100007870002
6300000100008010001
(22-54),(41-59)
6300000100008010002
6300000100008010003
5,7,9
6300000100008140001
6300000100008140002
(62-106),(69-125)
6300000100008230001
(4-60),(3-67)
6300000100008230002
16,20,22,(30-88),11,13,(15-27)
6300000100008260001
6300000100008260002
(1-63),(2-24)
6300000100008330001
(65-91),(76-96)
6300000100008330002
(28-74)
6300000100008330003
(2-98),(1-61)
6300000100008350001
108,(89-91)
6300000100008350002
6300000100008370001
8-12
6300000100008370002
6300000100008470001
6300000100008470002
(184-258),(127-143)
6300000100008480001
(80-150)
6300000100008480002
(51-125)
6300000100008480003
(10-42),(1-49)
6300000100008480004
6300000100008520001
(30-52)
6300000100008520002
(2-32),52,54,56,130
6300000100008530001
(1-13),45,45,47,51,71
6300000100008530002
(25-43)
6300000100008530003
(6-18),(1-29),33,99,101
6300000100008550001
(40-72),31,53,(57-73)
6300000100008550002
3,7,13,15
6300000100008550003
6300000100008590001
433115
(2-22),(3-7),13
6300000100008590002
1,(11-47)
6300000100008610001
6300000100008610002
(84-104),(118-142),(81-149)
6300000100008610003
(116-154),162,3,(115-169)
6300000100008690001
(20-112),(7-109)
6300000100008690002
6300000100008700001
6300000100008700002
13,13/106
6300000100008700003
6300000100008710001
(48-68),(45-59)
6300000100008710002
6300000100008780001
(42-82),(45-85)
6300000100008780002
6300000100008960001
6300000100008960002
(38-68)
6300000100009010001
47,(51-67)
6300000100009010002
6300000100009100001
(11-75)
6300000100009100002
6300000100009100003
6300000100009100004
(88-116)
6300000100009100005
(77-143)
6300000100009100006
(165-175)
6300000100009100007
(145-163)
6300000100009100008
(120-128)
6300000100009100009
6300000100010070001
(36-100),(39-107)
6300000100010070002
(24-36),(23-35)
6300000700000200001
445010
6324
6323
36440373000
(10-22),(5-15)
6300000700000200002
445011
(60-92)
6300000700000510001
445056
6320
6321
36440363000
94-126
6300000700000510002
445039
(30-58),(1-63)
6300000700000510003
445030
6300000700000510004
445047
(2-10),(1-47)
6300000700000620001
445004
(12-32),(49-61)
6300000700000620002
445022
(34-98),(63-99)
6300000700000620003
445007
(36-70)
6300000700000730001
445031
6300000700000730002
(72-98),(51-99)
6300000700000730003
445044
6300000700000730004
(13-37),11
6300000700000900001
(39-99)
6300000700000900002
6300000700000900003
(68-104)
6300000700000900004
6300000700000900005
6300000700001000001
(56-94),(41-103)
6300000700001000002
(96-150),(105-151)
6300000700001000003
(2-8),18ª6,(3-9)
6300000700001010001
445020
(10-32),(11-33)
6300000700001010002
445021
6300000700001010003
445054
2,(1-25)
6300000700001270001
6300000700001270002
445042
(20-98)
6300000700001270003
445040
(27-99)
6300000700001270004
6300000700001270005
445025
(24-40),(17-39)
6300000700001440001
445005
6322
36440368000
(6-18),(3-15)
6300000700001440002
445041
(2-24),(75-81),(85-91)
6300000700001470001
445035
(26-98),(95-113)
6300000700001470002
(51-55)
6300000700001470003
445009
(57-73),83
6300000700001470004
445017
6300000700001470005
(36-64),(29-39)
6300000700001530001
445019
(2-34),(1-27),29
6300000700001530002
(66-98),(41-99)
6300000700001530003
(14-38),(25-57)
6300000700001620001
445008
6300000700001620002
445046
(40-92)
6300000700001620003
445045
6300000700001660001
6300000700001660002
(29-43),(50-62)
6300000700001660003
6300000700001660004
(38-48)
6300000700001660005
6300000700001660006
445036
63-99
6300000700001660007
445032
(56-82),(57-87)
6300000700001780001
(92-94),(91-103)
6300000700001780002
(10-24),(1-23)
6300000700001860001
34,(25-53)
6300000700001860002
6300000700001860003
445015
(28-98)
6300000700001910001
6300000700001910002
(13-99)
6300000700001910003
(2-100)
6300000700002010001
6300000700002010002
(2-46),(1-45)
6300000700002120001
(48-72),(47-75)
6300000700002120002
6300000700002210001
(12-18),(15-25)
6300000700002210002
(2-88),(1-59)
6300000700002230001
(73-97),(94-116)
6300000700002230002
(99-155),(118-160)
6300000700002230003
6300000700002410001
(2-150),(45-151)
6300000700002410002
445012
125-139
6300000700002420001
(78-96),(141-155),41
6300000700002420002
163-171
6300000700002420003
(2-16),(1-67)
6300000700002420004
(18-76),(69-121)
6300000700002420005
(22-50),(21-49)
6300000700002560001
(56-68),(55-81)
6300000700002560002
(130-180),(147-189)
6300000700002620001
(2-128),(1-145)
6300000700002620002
(10-18),17
6300000700002670001
445013
(20-64),21
6300000700002670002
6300000700002750001
(96-198),(105-197)
6300000700002750002
(41-103),(56-94)
6300000700002750003
(24-74),(23-59)
6300000700002830001
(78-92),(61-87)
6300000700002830002
(89-99)
6300000700002830003
(94-160),(101-159)
6300000700002830004
6300000700002830005
(2-22),(1-45)
6300000700002870001
(24-60)
6300000700002870002
(62-98),(47-99)
6300000700002870003
(18-28),(15-25)
6300000700002910001
445037
6300000700002910002
445028
6300000700002910003
445051
(30-98)
6300000700002910004
445026
6300000700002910005
(2-48),(1-75)
6300000700003010001
(50-74)
6300000700003010003
76-100
6300000700003010004
(8-16),(1-23)
6300000700003120001
6300000700003120002
6300000700003160001
24,(26-64),(27-65)
6300000700003160002
(66-76)
6300000700003160003
(6-20),(5-25)
6300000700003160004
(78-98),(67-99)
6300000700003160005
(2-12),20,(1-29)
6300000700003220001
(14-18),(22-200),(31-199)
6300000700003220002
(10-160),(9-159)
6300000700003250001
6300000700003250002
6300000700003310001
(100-200)
6300000700003310002
(26-80),(25-63)
6300000700003310003
(65-87),107
6300000700003310005
(89-105),(109-199)
6300000700003310006
(90-98)
6300000700003310007
(2-78),(1-79)
6300000700003420001
(114-198),(119-199)
6300000700003420002
(80-112),(81-117)
6300000700003420003
(2-20),(1-7)
6300000700003460001
36,38-98
6300000700003460002
(9-37),(22-34)
6300000700003460003
(8-26),(1-21)
6300000700003520001
(35-63)
6300000700003520003
(2-52),(1-59)
6300000700003560001
(54-152),(61-87)
6300000700003560002
(89-155)
6300000700003560003
(2-18),(1-35)
6300000700003670001
(20-198),(37-199)
6300000700003670002
(2-30),(34-36),(1-27)
6300000700003770001
(38-98),(37-99),32
6300000700003770002
(108-130),(107-135)
6300000700003900001
(52-60),(51-59)
6300000700003900002
(62-98),(61-99)
6300000700003900003
(2-42),(1-3),(7-37)
6300000700004010001
6300000700004010002
(44-98),(39-99)
6300000700004010003
6300000700004110001
445027
(32-98)
6300000700004110002
6300000700004110003
(9-99)
6300000700004110004
445057
(2-64),(1-57),61
6300000700004220001
(66-98),(63-99),59
6300000700004220002
6300000700004250001
(2-98),(43-99)
6300000700004250002
6300000700004260001
445029
6300000700004260002
24-55
6300000700004260003
6300000700004260004
445034
56-98
6300000700004260005
6300000700004260006
445033
6300000700004420001
(28-42),(25-57)
6300000700004420002
6300000700004460001
(54-68),(41-69)
6300000700004460002
(16-38)
6300000700004520001
(15-33)
6300000700004520002
(2-14),(1-5)
6300000700004520003
(35-99)
6300000700004520004
6300000700004520005
(62-98)
6300000700004520006
6300000700004520007
6300000700004730001
(18-64),(17-49)
6300000700004730002
(66-98),(51-67)
6300000700004730003
6300000700004730004
(2-84),(1-41)
6300000700004810001
(86-124),(43-125)
6300000700004810002
6300000700004820001
6300000700004820002
6300000700004820003
6300000700004820004
(43-121)
6300000700004820005
(66-120)
6300000700004820006
6300000700004820007
(1-99),12
6300000700004910001
6300000700004910002
6300000700005100001
(28-98),(25-99)
6300000700005100002
6300000700005100003
(8-76),(1-77)
6300000700005200001
(78-120),(79-121)
6300000700005200002
6300000700005200003
(30-32),(17-99)
6300000700005240001
(2-28),(34-98),(1-15)
6300000700005240002
6300000700005300001
6300000700005300002
6300000700005370001
(40-64),(37-59)
6300000700005370002
6300000700005420001
6300000700005420002
6300000700005420003
(16-98),(35-99)
6300000700005420004
(2-38),(1-55)
6300000700005550001
6300000700005610001
(98-158),(97-149)
6300000700005610002
6300000700005650001
(48-126),(47-123)
6300000700005650002
(2-10),(1-23)
6300000700005700001
6300000700005700002
(8-94),(15-107)
6300000700005730001
(96-200),(109-251)
6300000700005730002
6300000700005730003
(1-17),(8-18)
6300000700005800001
(24-40),(19-31)
6300000700005800002
6300000700005800003
6300000700005800004
6300000700005800005
6300000700005800006
(63-89)
6300000700005800007
(25-45)
6300000700005880001
(51-159)
6300000700005880002
52,60,66,70,87
6400000100000340003
410059
6451
63401368000
(1-21),(2-20),24
6400000100000340004
410039
(23-77),(26-50)
6400000100000340005
410022
1,3,3,4,5-8,9,10,12,12,14
6400000100000560001
410080
6453
63401376000
145/1,(11-115),145,225
6400000100000560002
410064
44/62,1,3,7,8,9,9,12
6400000100000560003
6400000100000620001
410054
6454
63401380000
129/1,125/34,93,123,140
6400000100000620002
410057
31-74,77,79
6400000100000620003
410053
78,(156-998)
6400000100000620004
(80-154),(81-169),76
6400000100000620005
6400000100000640001
25-999,27
6400000100000640002
1-16,(18-44)
6400000100000790001
83
6400000100000790005
410012
6450
6452
63401372000
(19-35),(46-76)
6400000100000790007
410004
(85-999),(140-998)
6400000100000790008
410005
37,(28-54)
6400000100000800001
410019
(1-35),(2-26),55,51
6400000100000800002
6400000100000820001
410078
6455
63401386000
6400000100000820002
(1-7),(2-24)
6400000100000820003
(29-49),66,66
6400000100000820004
410026
6400000100000820005
11/15,(1-15),19,31,44,50,86
6400000100001000001
20/30,22/30,28/30,(18-32),18
6400000100001000002
410049
(2-16),17,4,4,4,6,8,8
6400000100001000003
410015
40,42,46,48
6400000100001000004
(8-48),(11-67)
6400000100001170005
410056
(69-167)
6400000100001170007
410071
(1-99),(2-108)
6400000100001430001
410030
63401364000
(101-177),(110-178)
6400000100001430002
(179-999),(180-998)
6400000100001430003
6400000100001460004
6400000100001460005
(165-233),(160-218),(224-230)
6400000100001480003
(113-137),(68-102)
6400000100001480007
(377-393),338
6400000100001480008
410003
(104-158)
6400000100001480009
(232-236),(240-258),235,237,237,241
6400000100001480013
410009
(260-334),(273-341)
6400000100001480014
6400000100001530001
(29-47),(24-30)
6400000100001530002
6400000100001710001
6400000100001710003
20,(11-19)
6400000100001920001
410065
(2-18),(3-7)
6400000100001920002
410040
2,4,4,6
6400000100001980001
6400000100001980003
6400000100001980004
(32-998),(43-999)
6400000100001980005
6400000100002170001
410002
(22-36)
6400000100002170002
410031
1,29,33,35,39,43,45
6400000100002270001
18/2,32/34,(47-71),(18-34)
6400000100002270002
410600
(73-89)
6400000100002270003
(229-251),(204-232)
6400000100002270004
(3-27),(2-16)
6400000100002270005
410028
(89-227),133,(52-196)
6400000100002270006
1-30,32,49
6400000100002490001
410008
31,34,50-86
6400000100002490002
23
6400000100002570001
410052
6400000100002570002
68,70,80
6400000100002570003
410051
6400000100002570004
410033
1-421
6400000100002630001
422-481,487-815
6400000100002630002
486
6400000100002630003
915,917,(912-998)
6400000100002630004
6400000100002660001
6400000100002660002
6400000100002660003
6400000100002690001
410047
(23-999),(34-998)
6400000100002690002
7,8,9,10-999
6400000100002750001
410001
6400000100002750002
6400000100002800001
410044
(1-35),(39-83),6,6,(14-22),(28-76)
6400000100002800002
410069
7,27,28,77,364,413,414
6400000100002990002
(16-26)
6400000100003190001
6,(7-21),(25-27)
6400000100003190002
55/57,43,56,58,59,63,(64-998)
6400000100003270001
(63-65)
6400000100003270002
6400000100003270003
6400000100003290001
1/9,6/10
6400000100003290002
1-15,36,70,70
6400000100003450001
410036
(33-89),(40-66),80,80
6400000100003450002
410060
(43-999),(18-998)
6400000100003460001
6400000100003460002
2,23,25,29/45
6400000100003460003
6400000100003600001
410048
(59-257),258,260,261
6400000100003600002
6400000100003700001
25-36
6400000100003700002
37-123
6400000100003700003
6400000100003870001
44,44
6400000100003870002
(49-999),12,(46-998)
6400000100003870005
1,(2-26)
6400000100003910002
6400000100003910003
(35-41),80
6400000100003910004
(43-999),(82-998)
6400000100003910005
143/147,(149-207),(158-186)
6400000100004100001
(202-998),(221-999)
6400000100004100003
(37-141),(32-156)
6400000100004100004
6400000100004250001
6400000100004250002
3,(4-8)
6400000100004260001
37-43
6400000100004260002
1-19,21,23,25
6400000100004510001
6400000100004510002
2/6,3-60,(62-68)
6400000100004920001
51,(61-999),(72-998)
6400000100004920002
52/64,2-44,46,48,50
6400000100004980001
(66-998),(45-999)
6400000100004980002
6400000100005270001
(39-55),(42-64)
6400000100005270002
(65-999),(66-998)
6400000100005270003
6400000100005300001
6400000100005300002
6400000100005310001
6400000100005310002
(1-99),100
6400000100005320001
6400000100005320002
6400000100005380001
6400000100005380002
139,(151-161),(222-296),(247-249)
6400000100005420001
267,269,289,291,197,(117-123)
6400000100005420002
31,31,(134-188),81-85
6400000100005420003
95,(125-129),(98-102)
6400000100005420004
(87-115),(55-57),(131-133)
6400000100005420005
(192-198)
6400000100005420006
(202-220)
6400000100005420007
6400000100005660001
(61-999),(62-998)
6400000100005660002
6400000100005830001
(65-73),(88-98)
6400000100005830002
(144-156)
6400000100005860001
6400000100005860002
(13-999),(158-998),(24-142)
6400000100005860003
(19-41),(55-57),(20-58)
6400000100005970001
1,(13-17),(2-6),(12-18)
6400000100005970002
410041
(59-81),(60-88)
6400000100005970003
(75-153),(66-156)
6400000100006010002
6400000100006010003
2,(3-31)
6400000100006010004
(35-59),(4-64)
6400000100006010005
39,41,43,(34-42)
6400000100006070001
6400000100006070002
(1-35),(2-30)
6400000100006070003
1,3-5
6400000100006090001
2,2,6,7,9,10,11,13,15,17,19,25,27,29
6400000100006090002
257,258,267,(266-270),273,274
6400000100006090003
6400000100006250001
6400000100006250002
2/6,(1-3),(14-18)
6400000100006300001
41,43,43,43,45,44
6400000100006300002
(5-51),(20-24)
6400000100006300003
90/69,1-25
6400000100006380001
(101-159),(106-160)
6400000100006380002
26-88,105
6400000100006380003
(89-99),(90-104)
6400000100006380004
6400000100006480003
(25-39),(24-38),24
6400000100006480004
(83-999)
6400000100006480005
(50-998)
6400000100006480006
(11-39),(2-54)
6400000100006560001
(43-45),60-66
6400000100006560002
3,3,25,27,(20-998)
6400000100006830001
6400000100006830002
(5-7),(13-17),(2-22)
6400000100006920001
6400000100006920002
1,2,2,7,(15-63),(18-58),25,25,27
6400000100007020001
(60-116),(65-151),73,64,62
6400000100007020002
6400000100007020003
(19-29),20,(26-34)
6400000100007090001
(1-15),17,17,17,(2-18),20,20,20
6400000100007090002
6400000100007110001
6400000100007110002
6400000100007110003
2,4/8,(1-49)
6400000100007130001
6400000100007130002
(19-47),(24-70)
6400000100007140001
6400000100007140003
(109-155),(126-188)
6400000100007140004
(157-167),(192-202)
6400000100007140005
(175-999),(204-998)
6400000100007140006
(97-107),(106-124)
6400000100007140007
159-999
6400000100007220001
6400000100007220002
6400000100007220003
(75-157),(84-156)
6400000100007220004
16
6400000100007250001
(1-17),(4-14)
6400000100007250002
410062
6400000100007320001
6400000100007320002
(3-47),(16-78),135,193,82,134
6400000100007380001
(49-999),(80-998)
6400000100007380002
6400000100007570001
6400000100007570002
23,39,45,63-67
6400000100007670001
6400000100007670002
6400000100007670003
33,43,51,55
6400000100007670004
54/29,(1-19),(2-54)
6400000100007680001
(31-999),(58-998)
6400000100007680002
20/29,(1-999),18,20,28
6400000100007690001
6400000100007690002
(40-88)
6400000100007690003
(1-23),(20-36)
6400000100007780001
(25-63),(38-72)
6400000100007780002
(65-73),(74-998)
6400000100007780003
16/20,22/26,(37-83),24,26,2
6400000100008080001
19/27,31/67,127
6400000100008080002
(3-9),(2-20)
6400000100008080003
(85-125),(28-40),62
6400000100008080004
113
6400000100008090001
3,(2-20),21
6400000100008090002
1,(22-32),(33-51)
6400000100008090003
50,52,73,73
6400000100008090004
60,62,80,83,85,87
6400000100008090005
(34-40),(53-65),95
6400000100008090006
2-24,26-999
6400000100008210002
(109-999),(84-120)
6400000100008240004
(124-236)
6400000100008240007
6400000100008580002
(60-134),(75-145)
6400000100008580003
7-56,58,1,3
6400000100008580004
(147-209)
6400000100008580006
(136-196)
6400000100008580007
(198-202),(211-225)
6400000100008580008
2/1
6400000100008580009
(1-13),(27-37),(45-59),(2-96)
6400000100008640001
6400000100008640004
2,(10-36)
6400000100008780001
33,35,37,38,62-999
6400000100008780002
(1-31),(41-61),(40-56)
6400000100008780003
118-144,192
6400000100008830001
(1-55),(2-106)
6400000100008830002
(57-77),110,108,104,105,109
6400000100008830003
(79-89),91,93,93,93,(112-116)
6400000100008830004
(1-999),1,3,13,21,23
6400000100008860001
6400000100008860002
(121-131),26
6400000100008930001
410076
(9-69),(2-22)
6400000100008930002
6400000100008930003
6400000100009010001
6400000100009010002
1,1,2-11
6400000100009240001
21,55-57,62,199
6400000100009240002
4,12,23-35,39-51
6400000100009240003
6400000100009240004
43/53,(7-37),(2-38)
6400000100009250001
(47-73),(46-76)
6400000100009250002
(75-79),(80-84)
6400000100009250003
(83-999),78,(86-998)
6400000100009250004
283-999
6400000100009450001
1,4,11,(26-252),(29-237)
6400000100009450002
77/81,(53-125),(76-116)
6400000100009550001
(1-47),(2-74),47
6400000100009550002
49,51/8
6400000100009550003
61/13,61/67,(1-59),(2-48)
6400000100009560001
(82-118),(63-133)
6400000100009560002
(1-14),(9-13)
6400000100009690001
(15-61),(16-48)
6400000100009690002
(63-999),(50-998)
6400000100009690003
6400000100009770001
640008
62/70,(1-3),(7-69),(2-102)
6400000100009770002
(71-79),79,(114-126)
6400000100009770003
2-48
6400000100009820001
6400000100009820002
2-87,(89-103)
6400000100009830001
(90-998),(105-999)
6400000100009830002
(133-273),(152-322)
6400000100009880001
(1-57),(2-86)
6400000100009880002
(291-999),(328-998)
6400000100009880003
(59-131),(88-150)
6400000100009880004
6400000100009900001
(45-999),(54-998)
6400000100009900002
(1-13),(2-22),20
6400000100010050001
(17-49),(24-50)
6400000100010050002
(57-95),(52-98)
6400000100010050003
6400000100010110001
6400000100010110002
19,(19-107),(34-98)
6400000100010140001
6400000100010140002
6400000100010140003
2/1,2/2,2,(20-26),25,44-62,78-106
6400000100010220001
6400000100010220002
6400000100010220003
19,21
6400000100010220004
6400000100010300001
410017
(183-197),(228-254)
6400000100010300002
6400000100010300007
(45-121)
6400000100010300008
(108-126),123,125
6400000100010300009
1-3,(4-34)
6400000100010550001
(87-249)
6400000100010550007
(5-85),(36-68)
6400000100010550009
(70-244)
6400000100010550010
6400000100010610001
6400000100010610002
(39-65)
6400000100010610003
(67-999),(58-998)
6400000100010610004
6400000100010610005
(24-56)
6400000100010610006
(1-33),(2-84)
6400000100010680001
(35-145)
6400000100010680002
(147-191),(132-186)
6400000100010680011
(263-267),(258-264)
6400000100010680012
10,14,16,38,40
6400000100011010001
17,19
6400000100011010002
34/36,(1-69),(2-8),(42-68),30,34,36
6400000100011010003
6400000100011040001
(19-29),(20-24)
6400000100011040002
(31-999),(26-998)
6400000100011040003
103/107,103,(105-127)
6400000100011050001
(1-55),23,(72-92)
6400000100011050002
(129-137),(63-103),(96-176)
6400000100011050003
(139-999),(178-998)
6400000100011050004
(2-6),11,13,(28-68)
6400000100011050005
6400000100011130002
6400000100011130003
1-22,24
6400000100011150001
102,(116-168),168,(117-137),166
6400000100011150002
23,25-115
6400000100011150003
2,4,5-15
6400000100011220001
6400000100011220002
10,(11-19)
6400000100011320001
(16-20),17,(21-25)
6400000100011320002
6400000100011320003
6400000100011520001
6400000100011520002
6400000100011530001
(7-999),(2-998)
6400000100011530002
133,133
6400000100011540001
6400000100011540002
(33-131),(36-152)
6400000100011540003
1-32,6,34
6400000100011570001
33,35-62
6400000100011570002
6400000100011620001
(19-65),(12-52)
6400000100011620002
6400000100011620003
6400000100011680001
(68-998),(73-999)
6400000100011680004
6400000100011730001
6400000100011730002
(67-999),68,(70-998)
6400000100011730003
(19-63),(28-66)
6400000100011730004
(1-75),(2-62)
6400000100011740001
(64-98)
6400000100011740003
(77-89)
6400000100011740004
(115-185),(120-202)
6400000100011790001
(1-111),(2-118)
6400000100011790002
(187-211),(204-218)
6400000100011790003
(33-71),(2-40)
6400000100012360001
6400000100012360002
(42-52),(73-75)
6400000100012360003
(54-998),(77-999)
6400000100012360004
28/1,(15-23),30,30
6400000100012470001
1,(25-37),(32-50)
6400000100012470002
(1-13),(8-20)
6400000100012470004
6400000100012470005
(52-88)
6400000100012470006
4,8,8,10
6400000100012490001
6400000100012490002
1-63,(65-69)
6400000100012580001
(91-999),(64-998)
6400000100012580002
6400000100012660001
(29-35),(24-30)
6400000100012660002
410035
6400000100012680001
(33-53),(26-40)
6400000100012680002
6400000100012800001
6400000100012800002
35/45
6400000100012860001
47/61,(63-71),14
6400000100012860002
1,2,10/1,12,12,14,16,16,16,16,20
6400000100012860003
410010
6400000100012990001
410007
6400000100012990002
6400000100013440001
42,(53-83)
6400000100013440004
(44-998),(85-999)
6400000100013440005
(17-73),(2-88)
6400000100013680001
(75-87),(90-102)
6400000100013680002
6400000100013760001
(36-68)
6400000100013760002
6400000100013940003
(111-189),(128-194)
6400000100013940004
(191-999),(196-998)
6400000100013940005
6400000100013940006
(67-109),(76-126)
6400000100013940007
(1-97),(4-110)
6400000100013970001
(99-999),(112-998)
6400000100013970002
2,4,6-9,243-259,(25-229),(24-242)
6400000100014000002
(1-3),4
6400000100014110001
63401000000
(11-65),(6-42)
6400000100014110007
(44-998)
6400000100014110008
6400000100014290001
410020
2/4,4/5
6400000100014290002
26-39,39,28
6400000100014290003
42-64,56
6400000100014290004
6400000100014300001
6400000100014300002
50,58,54,56,60
6400000100014300003
50,75,77
6400000100014380001
52,52
6400000100014380002
(1-5),8
6400000100014380003
6400000100014430001
(2-24),14
6400000100014430002
15,(23-41)
6400000100014450001
44,44,50,50,52
6400000100014450002
(43-63),19,(54-86)
6400000100014450003
(1-11),(2-46),(65-75)
6400000100014450004
(1-33),(8-30),36,36
6400000100014480001
(35-63),(38-102)
6400000100014480002
(57-77),(72-86)
6400000100015060001
(26-70),(35-55)
6400000100015060002
6400000100015180001
92/2,(47-81),(74-92)
6400000100015180002
6400000100015880001
10/1,6,10,12,14,(48-66)
6400000100015880002
6400000100015880003
44/64,(12-40),46,(113-137)
6400000100015880004
(29-49),36
6400000100015880005
(68-100),102,102
6400000100015880006
221,221/231,223/231,(188-190),223
6400000100015910001
6400000100015910002
(57-95),(46-88)
6400000100015910004
(151-161),(118-130),132
6400000100015910005
(165-215),(132-186)
6400000100015910006
(97-109),(90-92)
6400000100015910007
(202-998),(235-999)
6400000100015910009
6400000100016120001
6400000100016120002
(9-13),(6-14)
6400000100016120003
6400000100016350001
6400000100016350002
6400000100016910001
6400000100016910002
(187-999),(204-998)
6400000100016910003
38/40,73/75,42,44,83,85,87
6400000100016920003
(229-251),(204-230)
6400000100016920005
6400000100016920006
112-999
6400000100016930001
53/57,55/57,59/65,69/73,(43-51)
6400000100016930002
79/85,87/91,97/101,103,87,91,73
6400000100016930003
(107-111)
6400000100016930004
410029
(17-33),37,39,41
6400000100016930005
(2-110),105
6400000100016930006
6400000100017300001
(46-998),(49-999)
6400000100017300002
6400000100017650001
6400000100017650002
(22-106)
6400000100017650004
6400000100017650007
6400000100017650008
6400000100017650009
6400000100017900001
(23-43),(22-40)
6400000100017900002
22/30,18,18,20,32
6400000101700000001
(1-9),13,(17-999)
6400000101700000002
(1-87),(2-134)
6400000500000390001
412309
6440
63410000000
(89-999),(136-998)
6400000500000390002
412315
(43-81),(34-58)
6400000500000410001
412305
6400000500000460001
(45-999),(42-998)
6400000500000460002
412308
6400000500000470001
6400000500000470002
(1-999),(2-998)
6400000500000520001
137,139,144,146,148
6400000500000520002
(1-63),(2-36)
6400000500000830001
(65-69),(38-48)
6400000500000830002
(71-999),(50-998)
6400000500000830003
412316
26,52,54
6400000500000850001
6400000500000850002
412302
6400000500000930001
6400000500000930002
6400000500000940001
(63-999),(94-998)
6400000500000940003
6400000500000980001
412311
15,15,(17-21),(16-24)
6400000500000980002
412307
6400000500001030001
52,54,56,58,97
6400000500001030002
6400000500001040002
6400000500001080001
412306
6400000500001080002
6400000500001160001
(39-155),(50-158)
6400000500001160003
(157-999),(162-998)
6400000500001160004
(1-97),(2-110)
6400000500001230001
6400000500001230002
(1-55),(2-46)
6400000500001360001
(57-999),(48-998)
6400000500001360002
6400000500001380001
(45-999),(46-998)
6400000500001380002
(1-43),(2-38)
6400000500001560001
(45-999),(40-998)
6400000500001560002
6400000500001600001
6400000500001600002
(1-67),(2-78)
6400000500001710001
(69-999),(112-998)
6400000500001710002
11,11,11,13,13,13,15,15,15
6400000500001710003
412303
(80-110)
6400000500001710004
6400000500001800001
(15-127),(14-154)
6400000500001800002
(129-159),(156-210)
6400000500001800003
(161-999),(212-998)
6400000500001800004
6400000500001850001
412314
6400000500001860001
(39-999),(34-998)
6400000500001860002
6400000500001930001
6400000500001930002
6400000500001940001
412304
9,27,29
6400000500001940002
6400000500001990001
(23-211),(32-236)
6400000500001990002
(213-999),(238-998)
6400000500001990003
6400000500002120001
(103-999),(104-998)
6400000500002120002
6400000500002200001
(69-999),(76-998)
6400000500002200002
(1-137),(2-198)
6400000500002310001
(139-999),(200-988)
6400000500002310002
(61-999),(20-998)
6400000500002360001
(1-59)
6400000500002360002
6400000500002400001
(63-999),(58-998)
6400000500002400002
(1-15),(26-50)
6400000500002410001
6400000500002410002
6400000500002420001
6400000500002420002
6400000500002810001
6400000500002810002
6400000500002930001
6400000500002930002
(1-999),(2-22)
6400000500003040001
6400000500003040002
6400000700000020001
412801
6432
6442
63418000000
(17-127),(34-144)
6400000700000020002
412800
(129-199),(146-998)
6400000700000020003
412802
6400000700000050001
(27-999),(42-998)
6400000700000050002
(1-45),(2-38)
6400000700000090001
(47-67),(40-56)
6400000700000090002
(69-999),(58-998)
6400000700000090003
412804
6400000700000100001
(19-87),(34-106)
6400000700000100002
(89-999),(108-998)
6400000700000100003
6400000700000310001
6400000700000310002
6400000700000380001
(25-105),(20-104)
6400000700000380002
(107-999),(109-998)
6400000700000380003
6400000700000400001
6400000700000400002
(1-65),(2-54)
6400000700000420001
(67-999),(56-998)
6400000700000420002
6400000700000480001
(57-999),(52-998)
6400000700000480002
6400000700000520001
6400000700000520002
6400000700000540001
6400000700000540002
6400000700000550001
6400000700000550002
6400000700000590001
6400000700000590002
6400000700000610001
(5-999),(10-998)
6400000700000610002
6400000700000620001
6400000700000620002
6400000700000770001
6400000700000770002
(1-37),(2-46)
6400000700000790001
(39-999),(48-998)
6400000700000790002
6400001000000060001
413723
6445
63435000000
(2-34),(1-21),(35-47)
6400001000000060002
413729
(136-170)
6400001000000130001
413725
(172-300),(173-301)
6400001000000130002
413721
(2-134),(1-171)
6400001000000130003
413720
(62-72),(55-73)
6400001000000180001
74/1,(74-194),(75-217)
6400001000000180002
413722
(2-60),(1-53)
6400001000000180003
6400001000000210001
(38-100),(45-103)
6400001000000210002
(2-22),(1-21)
6400001000000220001
(24-60),(23-71)
6400001000000220002
(2-10/5),(64-100),(1-31)
6400001000000230001
413728
(12-62),(33-129)
6400001000000230002
413555
(2-84),(1-31)
6400001000000240001
(86-126),(33-43)
6400001000000240002
413726
84/1,(2-82),(1-65)
6400001000000250001
(67-97)
6400001000000250002
(84-120),(99-149)
6400001000000250003
158/1,181
6400001000000280001
179/1,(86-156),(119-179)
6400001000000280002
(2-84),(1-117)
6400001000000280003
6400001000000290001
6400001000000290002
(78-300),(141-211)
6400001000000320001
(213-299)
6400001000000320002
6400001000000320003
6400001000000320005
(2-68),(1-95)
6400001000000330001
(300-360),(317-449)
6400001000000330002
(70-298),(97-315)
6400001000000330003
84-209
6400001000000340001
(2-82),(1-83)
6400001000000340002
80/1,(82-100),(91-105)
6400001000000410001
80,80/2,(2-78),(1-89)
6400001000000410002
(2-30),(1-47)
6400001000000430001
(278-384),(317-439)
6400001000000430002
(32-276),(49-315)
6400001000000430003
37/1,37/2,37/3,(42-100),(39-101)
6400001000000460001
(2-40),(1-35),37
6400001000000460002
(2-56),(11-111)
6400001000000480001
(58-80),(113-163)
6400001000000480002
(2-96),(1-29)
6400001000000570001
(284-434),(55-251)
6400001000000570002
(436-452),(253-265)
6400001000000570003
(98-282),(31-53)
6400001000000570004
(2-62),(1-51)
6400001000000630001
(64-74),(53-97)
6400001000000630002
(152-178),(213-245)
6400001000000640001
(106-150),(121-211)
6400001000000640002
(2-104),(1-119)
6400001000000640003
(2-28),(1-29)
6400001000000740001
(30-368),(31-285)
6400001000000740002
(370-486),(287-369)
6400001000000740003
6400001000000780001
(274-346),(305-373)
6400001000000780002
(40-272),(33-303)
6400001000000780003
171/1,(44-154),(101-171)
6400001000000810001
(156-254),(173-249)
6400001000000810002
(2-42),(1-99)
6400001000000810003
86/1,(36-86)
6400001000000820001
(2-34),(1-41)
6400001000000820002
(104-202),(95-179)
6400001000000830001
(2-102),(1-93)
6400001000000830002
(2-62),(1-25)
6400001000000840001
(318-402),(283-361)
6400001000000840002
(64-316),(27-281)
6400001000000840003
(50-198),(9-101)
6400001000000890001
(18-48),(3-7)
6400001000000890002
(2-16),1
6400001000000890003
(200-214),(103-147)
6400001000000890004
6400001000000910001
(42-58),(69-93)
6400001000000910002
(60-218),(95-279)
6400001000000910003
(99-147)
6400001000000930001
(150-158)
6400001000000930002
(2-148),(1-97)
6400001000000930003
6400001000000940001
(36-148),(37-165)
6400001000000940002
(2-74),(3-47),1,49
6400001000000950001
(76-80),(51-79),49/1
6400001000000950002
6400001000001340001
6400001000001340002
(2-8),(3-27)
6500000100000050001
693020
6501
64401000000
6500000100000050002
693008
6500000100000060001
693010
(32-34),(29-31)
6500000100000060002
693007
(8-136),(1-153)
6500000100000070001
(174-999),(155-999)
6500000100000070002
(4-120),(9-27),(31-127)
6500000100000090001
(122-999),(135-999)
6500000100000090002
(2-12),(1-7)
6500000100000120001
693000
(26-999),(11-999)
6500000100000120002
(2-32),(1-3)
6500000100000200001
(34-999)
6500000100000200002
(6-34),(42-104),(31-45),ª45
6500000100000230001
693004
(36-40),ª36,ª38,ª40
6500000100000230002
693013
(2-26),(1-45)
6500000100000270001
693001
(28-999),(47-999)
6500000100000270002
(2-14),(1-47)
6500000100000280001
(16-80),(49-91)
6500000100000280002
(17-29)
6500000100000290001
6500000100000310001
693006
(10-54),(1-77)
6500000100000390001
6500000100000390002
(2-22),(3-7),26,28
6500000100000520001
(30-999),(11-99)
6500000100000520002
693023
(14-26),(15-17)
6500000100000540001
(30-999),(21-999)
6500000100000540002
6500000100000620001
(2-80),(1-17),(41-63)
6500000100000620002
6500000100000640001
(12-34),(13-57)
6500000100000640002
(36-44),72
6500000100000640003
(120-122),(135-143)
6500000100000640004
6500000100000730001
6500000100000730002
(114-126),(27-43)
6500000100000730003
(2-28),(1-23),27
6500000100000770001
693005
(30-124),(25-65)
6500000100000770002
(126-170)
6500000100000770003
(2-12),(1-15)
6500000100000840001
(14-82),(17-85)
6500000100000840002
(2-76),(1-65)
6500000100000860001
(78-999),(67-999)
6500000100000860002
(2-44),(1-83)
6500000100001180001
(92-999),(93-999)
6500000100001180002
(4-8),(1-29),22,24 
6500000100001230001
(24-999),(31-999)
6500000100001230002
(34-128),(1-31),129,131
6500000100001240001
(140-166),(133-195)
6500000100001240002
(188-194),186,212
6500000100001240003
(196-200),(209-227)
6500000100001240004
(276-314),(371-999)
6500000100001240005
(231-291),ª291
6500000100001240006
(3-15),12
6500000100001340001
(45-55),57
6500000100001340002
(18-42),(17-47)
6500000100001380001
(64-70),69
6500000100001380002
(2-84),(1-81)
6500000100001430001
(132-148),(167-999)
6500000100001430002
6500000100001460001
6500000100001460002
(2-92),(1-67)
6500000100001500001
693003
(94-252),(69-121),(133-219)
6500000100001500002
(254-296),(279-303)
6500000100001500003
(298-348),311,(319-341)
6500000100001500004
(378-999),(413-999)
6500000100001500005
6500000100001670001
693012
(30-68),(27-83)
6500000100001670002
(85-111)
6500000100001670003
(70-130),113
6500000100001670004
(176-182),(119-197),ª197
6500000100001670005
(184-292)
6500000100001670006
(235-379)
6500000100001670007
(422-999)
6500000100001670008
(22-46),(21-59)
6500000100001790001
6500000100001840001
(28-999),(27-999)
6500000100001840002
(7-25)
6500000100002110001
(4-22),3,5
6500000100002110002
(80-128),(65-105)
6500000100002110003
(24-78),(29-41),57
6500000100002110004
(53-63),ª65
6500000100002110005
(10-14),(1-19)
6500000100002130001
72,(30-50),52,31,(45-67)
6500000100002130002
(56-102),(69-999)
6500000100002130003
(14-30),(11-27)
6500000100002190001
(40-100),(43-65)
6500000100002190002
6500000100002190003
(102-999)
6500000100002190004
6500000100002260001
(74-84),(41-53)
6500000100002260002
(94-112)
6500000100002260003
9,57,61,63,83
6500000100002260004
6500000100002280001
(118-148),(125-147)
6500000100002280002
(150-158),(149-161)
6500000100002280003
(4-28),(1-7),(11-15)
6500000100002440001
(39-42),(19-35)
6500000100002440002
6500000100002470001
6500000100002470002
(2-8),(1-25)
6500000100002490001
(26-86),(27-151)
6500000100002490002
(88-999),(153-999),113,129,139,145,147
6500000100002490003
(6-58),(11-77)
6500000100002590002
(60-999),(83-999)
6500000100002590003
(14-114),(7-101)
6500000100002820001
(116-999),(103-999)
6500000100002820002
6500000100002830001
(22-999),(19-999)
6500000100002830002
(10-94),(1-89),111
6500000100002950001
(102-999),(113-999),111 ,111¡
6500000100002950002
6500000100003000001
(2-52),(3-103)
6500000100003000002
(54-100),(105-145)
6500000100003000003
(120-130),169
6500000100003000004
(244-260),(241-253)
6500000100003000005
6500000100003030001
(30-999),(31-999)
6500000100003030002
6500000100003170001
(43-75)
6500000100003170002
ª83,103
6500000100003170003
(160-174)
6500000100003170004
(200-202),(135-153)
6500000100003170005
2,(1-109)
6500000100003210001
6700000300000300001
214000
6731
66401370000
6700000300000300002
6730
66401368000
6700000300000870001
(12-76),2,2/9,4/2,8
6700000300000870002
214018
6700000300001870001
214013
(45-99)
6700000300001870002
214007
24-34
6700000300001870003
214004
(38-100)
6700000300001870004
214019
6700000300002080001
(9-51)
6700000300002080002
(16-50)
6700000300002080003
6700000300002080004
6700000300002510001
(17-59),(18-60)
6700000300002510002
(13-21),(10-86)
6800000400004570001
392036
6829
68401000000
4,7
6800000400004570002
392000
(5-25),(2-12)
6800000400004600001
(9-21),(8-38),7
6800000400004630001
2,5,7
6800000400004630002
6800000400004960001
392012
(107-185),(108-172)
6800000400004960002
392021
6 ,14-65
6900000100000030001
170024
6950
28401000000
3,10
6900000100000030002
170023
6900000100000090001
170003
6952
6900000100000090002
170042
6900000100000100001
170036
(2-6),(11-17),(24-32)
6900000100000100002
170039
(29-69)
6900000100000340001
170021
6900000100000340002
6900000100000340003
170026
(18-76)
6900000100000340004
170041
(2-16),7,7 
6900000100000360001
(9-15),17-44
6900000100000360002
22-34
6900000100000370001
170033
3,10 
6900000100000370002
170008
6900000100000910003
6900000100000910004
170000
6900000100001030001
2-12,14,28-31
6900000100001030002
4-46
6900000100001130001
170007
50-61,91/53
6900000100001130002
170019
6900000100001150001
65-112
6900000100001150002
4-79,(86-122)
6900000100001410001
(81-99),(124-198)
6900000100001410002
1-17,62/29,66/5,73
6900000100001440001
6900000100001440002
1-4,6-21
6900000100001580001
170034
6900000100001580002
170002
21,(52-66),74
6900000100001660001
170015
6900000100001660002
29,31,33-74
6900000100001820001
3,(17-27),(18-32)
6900000100001820002
3,13/12,(17-27),14,18,(24-28)
6900000100001900001
30,34,36
6900000100001900002
6900000100002210001
23-35
6900000100002210002
170028
4,6/15
6900000100002210003
10,(31-35)
6900000100002300001
(50-62)
6900000100002300002
1-18,46/29
6900000100002440001
19-66
6900000100002440002
2-46,50,59/70,62/71,64/68
6900000100002530001
6900000100002530002
(56-64),65-85,87,89,91
6900000100002600001
170012
1-55,57,59,61,63
6900000100002600002
6900000100002770001
15/44,16,17/56,19
6900000100002770002
1-13,15-19,21-69
6900000100002800001
14,20,71,(92-154)
6900000100002800002
2-10,(12-18)
6900000100002830001
(11-19),20-120
6900000100002830002
6900000100002870001
170001
1-7,10-12,(16-20)
6900000100002870002
6900000100003000001
(2-32),39/8,67,69/18,71/17,73,75/18
6900000100003000002
77/9,81/76,83,89,40/12
6900000100003000003
17-53
6900000100003010001
2-16,41/5
6900000100003010002
6900000100003490001
170100
6900000100003490002
13,15,22
6900000100003490003
3-19,(21-45),47,49-81
6900000100003530001
170016
25-43
6900000100003550001
6900000100003550002
2-83
6900000100003780001
87-120
6900000100003780002
3-33
6900000100003790001
79/36
6900000100003790002
16-46
6900000100003990001
7/63
6900000100003990002
6900000100004190001
6/34,8/31,10/28,12/29,36/6
6900000100004190002
49/85,51,53-67,(71-75)
6900000100004240001
170043
(1-3),(6-16)
6900000100004260001
6900000100004260002
6900000100004340001
4-18
6900000100004340002
56-89
6900000100004420001
3/21,10/15
6900000100004420002
8,(14-28)
6900000100004510001
(5-29),(2-6),(10-12),30-999
6900000100004510002
6900000100004720001
6900000100004720002
1-4,6,6 ,8
6900000100004760001
5,7-46
6900000100004760002
170040
6900000100004790001
6900000100004790002
6900000100004880001
17-63
6900000100004880002
6900000100005100001
1-54
6900000100005100002
170006
6900000100005170001
45,(55-119),(56-86),116,118,120-136
6900000100005170002
19-42
6900000100005290002
43-46,48-82,84,86
6900000100005290003
6900000100005420001
29-42
6900000100005420002
1,10,15,17,19,20,43,47,61,83,93,97,99
6900000100005520001
6900000100005520002
170004
105,107,119,121,4,42,48,70,82,94,118,122
6900000100005520003
1,11-34
6900000100006010001
3,4,5,6
6900000100006010002
12-61
6900000100006030001
5-11
6900000100006030002
6900000100006100001
(3-9),(15-19),(28-34),6,10,14
6900000100006100002
(21-55),(40-64),78,84
6900000100006100003
(1-7),(120-124)
6900000100006240001
(35-47),(14-24)
6900000100006240002
55,57
6900000100006240003
5-48
6900000100006430001
49-84
6900000100006430002
(28-40)
6900000100006470001
(2-10),5,26
6900000100006470002
(19-25),43,44,(48-54)
6900000100006470003
(27-35),(56-70)
6900000100006470004
9,15,(57-67),(26-56)
6900000100006630001
6900000100006630002
1,2,6,19
6900000100006750001
3,10,12,14,15,18,21,22,31,40,42,46,50
6900000100006750002
(2-92),(1-79)
6900000100007110001
(81-93),95,(94-114)
6900000100007110002
43-127,(30-42)
6900000100007440001
1-29,(31-41)
6900000100007440002
2-8,39/20
6900000100007540001
8,9/1
6900000100007540002
6900000100007590001
6900000100007590002
1,3,13/34,39,47,49,4,6,16,18,20,22
6900000100007640001
6900000100007640002
(35-39),(40-46)
6900000100007670001
1,6,12/28,26,36-45
6900000100007680001
36
6900000100007680002
(1-9),12
6900000100007710001
25,(48-78)
6900000100007710002
(4-22),(3-13)
6900000100007760001
(36-78),(17-23),25,82¡
6900000100007760002
10,12,26-35
6900000100007790001
1-9,11,13-25
6900000100007790002
(19-39),(42-46),62,70,82,84,86,90,94
6900000100007850001
1,9,16,17/1,19,40/2,(2-6),(24-28)
6900000100007850002
6900000100007850003
(6-26),7,(17-29)
6900000100007930001
28,30-71
6900000100007930002
3,6/15,8/15,13,15,16/8
6900000100008090001
(12-46),13/16,(17-49)
6900000100008090002
3,3/59,4,5,6,8/57,12
6900000100008120001
13-59
6900000100008120002
(37-74)
6900300100000620001
171988
6906
28405000000
(4-36),(1-35)
6900300100000620002
171987
6900300100000730001
171984
(20-136),(29-135)
6900300100000730002
(36-52),(25-51)
6900300100000810001
1-24,(26-34)
6900300100000810003
6900300100000950001
6900300100000950002
(28-46),(31-45)
6900300100001110001
6900300100001110002
(18-46),(37-47)
6900000600000540001
171151
6908
28414000000
(49-999),(48-999)
6900000600000540002
171167
(9-41),(18-44)
6900000600000620001
(43-999),(46-999)
6900000600000620002
(1-25),(133-147)
6900000600000630001
171160
(30-126),131
6900000600000630002
171157
(27-127)
6900000600000630003
(28-78),(29-71)
6900000600000740001
171158
6900000600000740002
171163
(2-62),(5-57)
6900000600000770001
(59-69),(66-76)
6900000600000770002
171162
(3-59),(4-44)
6900000600000830001
(63-121),(50-110)
6900000600000830002
39,40/35,41-42,47,49,63,69,79,81,82,84
6900000600001030001
86-87,89,90/65
6900000600001030002
94,96,106
6900000600001030003
6900000600001030004
(93-999),(108-999)
6900000600001030005
(10-46),(17-51)
6900000600001050001
(53-81),(52-76)
6900000600001050002
6900000600001290001
171164
(116-999),(123-999)
6900000600001290004
171155
(1-81),(2-108)
6900000600001330001
(83-999),(110-999)
6900000600001330002
(51-63),(72-84)
6900000600001340001
(1-47),(4-70)
6900000600001340002
(3-37),(2-56)
6900000600001360001
(137-999),(146-999)
6900000600001360002
(39-135),(58-144)
6900000600001360006
6900000600001440001
6900000600001440002
(35-41),(32-60),45/47,68
6900000600001460001
49,59,63,69/71,(76-90)
6900000600001460002
70,(92-104),106,(75-97)
6900000600001460003
(3-33),(2-8)
6900000600001460004
48,52/60,62,66/57,72/60,85-86,90,93,101
6900000600001610001
(2-38),(1-79),44,46
6900000600001610002
105-106,119/63,114,116 ,127-129,149,151
6900000600001610003
(11-35),(10-34)
6900000600001650001
171161
36-79
6900000600001650002
171168
(13-15),16
6900000600001810001
171159
11 
6900000600001810002
(1-11),(10-14)
6900000600001810003
(17-25),(14-26),58
6900000600001840001
(27-31),(28-36),(53-55),(62-66)
6900000600001840002
(65-73)
6900000600001840003
70/73,(72-90)
6900000600001840004
79/82,(83-101)
6900000600001840005
12/43
6900000600001880001
6900000600001900001
(64-82),(84-88)
6900000600001900002
171166
6900000600001930001
(69-999),(84-999)
6900000600001930002
(1-93),(2-50)
6900000600002050001
(52-999),(95-999)
6900000600002050002
(3-55),70 ,79 ,81 
6900000600002260001
(52-80),(63-81)
6900000600002260002
6900000600002360001
(37-55),(42-68)
6900000600002360002
(9-51),(8-32)
6900000600002480001
6900000600002480002
(59-81),(38-110),91 
6900000600002480004
6900000600002520001
(44-174)
6900000600002520002
(69-999),(72-999)
6900000600002700001
6900000600002700002
13/2,(15-39),40
6900000600002760002
6900000600002760003
6900000600002770001
(4-62),63
6900000600002770002
(10-98)
6900000600002810001
6900000600002810002
6900000600002850001
(63-91),(60-92)
6900000600002850002
6900000600002980001
(61-125),(62-88),(96-108),130
6900000600002980002
(8-70)
6900000600003030001
(17-45),(80-116)
6900000600003030002
6900000600003110001
(33-71),72
6900000600003110002
(1-101),(14-108)
6900000600003150001
(105-999),(110-999)
6900000600003150002
(24-100),(19-87)
6900900100000470001
172611
6912
6922
28216501000
(2-22),(1-17)
6900900100000470002
172610
(76-108),(79-107)
6900900100000980001
(12-20),(17-27)
6900000500000020001
171501
6910
28426000000
6900000500000020002
171506
(23-29),(26-30)
6900000500000150001
(4-22),(3-17)
6900000500000150002
(36-38),(33-37)
6900000500000150003
171508
8,8 ,10
6900000500000180001
171504
1-7,9,11-157
6900000500000180002
171505
(6-44),(9-47)
6900000500000250001
2,4,7
6900000500000250002
171507
(46-54),(49-61)
6900000500000250003
(28-60),(41-67)
6900000500000280001
6900000500000280002
(62-98),(75-115)
6900000500000280003
13-36,38,40,42
6900000500000290001
1,4,5,7,9,10
6900000500000290002
(44-78),(37-71)
6900000500000290003
(102-116),(105-111)
6900000500000330001
2-101
6900000500000330002
6900000500000380001
1-32,34-45
6900000500000380002
6900000500000440001
(2-52),(5-53)
6900000500000440002
6900000500000460001
2,6,(10-46),(3-31)
6900000500000480001
1,4,8
6900000500000480002
(48-88),(35-67)
6900000500000480003
(5-9),(10-34),38,40,46,52,(23-61),109
6900000500000570001
54,(64-124),43,(63-113)
6900000500000570002
(14-26),(52-62),(5-21),29,35,37
6900000500000640001
6900000500000640002
3,(2-10),25,30-34
6900000500000640003
(4-28),(1-17)
6900000500000720001
(30-36),(19-21)
6900000500000720002
2,2 ,(3-23)
6900000500000750001
(6-22),(27-37)
6900000500000750002
(32-38),(33-39),(46-54),(43-55),42 
6900000500000770001
6900000500000770002
67-123
6900000500000780001
7-25,(30-66),(35-59)
6900000500000780002
124-126
6900000500000780003
1-97,99-110
6900000500000800001
98,111,113
6900000500000800002
6900000500000880001
(1-53),(52-58)
6900000500000880002
(4-42),(1-31)
6900000500000890001
6900000500001170001
(86-102),(67-75)
6900000500001170002
(2-80),(1-69)
6900000500001440001
(71-113),(82-114)
6900000500001440002
(1-39),(8-40)
6900000500001450001
(16-62),(3-55),103
6900000500001470001
(64-98),(65-101),(105-119)
6900000500001470002
(12-48),(9-39)
6900000500001480001
6900000500001480002
2,8,10,(3-11)
6900000500001560001
6900000500001590001
(3-25),(4-24)
6900000500001600001
(26-30),(27-33)
6900000500001600002
(10-22),(13-37)
6900000500001610001
(12-16),(21-27)
6900000500001620001
(2-10),(3-17),29
6900000500001620002
(20-26),(31-35)
6900000500001620003
(96-114),(99-109)
6900000500001630001
(4-94),(1-97)
6900000500001630002
11,13,14
6900000500001750001
3,4,5,7/10
6900000500001750002
(20-22),(19-23)
6900000500001750003
6-54
6900000500001930001
(64-78),(63-83)
6900000500001930002
6901600100000250001
171661
6928
28232501000
(39-51),(36-46)
6901600100000250002
171660
6901600100000320001
(15-83),(34-58)
6901600100000320002
42-71
6902000000100150001
171901
6932
28240551000
6902000000100150002
171900
6902000000100640001
64-79
6902000000100640002
6900000400000490001
172521
28435000000
(19-59),(26-32)
6900000400000930001
172522
6900000400000930002
172523
2-6,8,10,12,14,14 ,24
6900000400001500001
172527
(1-83),(2-42),52
6900000200000520001
172003
6915
28450000000
(85-999),(44-999)
6900000200000520002
172009
6900000200000560001
172002
(39-999),(48-999)
6900000200000560002
172010
6900000200000610001
172008
6900000200000610002
172001
(40-999),(39-999)
6900000200000610003
172007
1-25,29-999
6900000200000630001
27,27,27
6900000200000630002
6900000200000670001
6900000200000670002
172006
6900000200000820001
(18-999),(19-999)
6900000200000820002
6900000200000830001
1-91
6900000200001080001
6900000200001080002
172011
6900000200001090001
(56-999),(59-999)
6900000200001090002
(1-49),(2-54)
6900000200001130001
51,55-999
6900000200001130003
6903500100000270001
171842
28455000000
3,5,7,10,11,12,13,14,15,17,24,26
6903500100000270002
171841
(68-100),(111-123),(129-133)
7000000300000100001
636037
7024
69541000000
(46-66),(63-107)
7000000300000100003
636017
(28-40),(53-61)
7000000300000100004
636036
7000000300000100005
636039
(2-20),(9-51)
7000000300000100006
636000
(94-122)
7000000300000120001
636019
7000000300000120002
636035
(121-133),(139-167)
7000000300000120003
(46-62),(67-81)
7000000300000120004
(64-92),(83-119)
7000000300000120005
(30-44),(55-63),49
7000000300000120006
7000000300000130001
7000000300000130002
636071
7000000300000200001
7000000300000200002
(2-4),(7-19)
7000000300000200003
7000000300000210001
7000000300000210002
7000000300000210003
7000000300000210004
7000000300000220001
(2-32),(1-11)
7000000300000220002
7000000300000220003
(66-90)
7000000300000220004
(34-44)
7000000300000220005
7000000300000310001
(5-7),(34-44)
7000000300000310002
7000000300000320001
(18-22),(17-25)
7000000300000320002
(4-22),13,13
7000000300000400001
7000000300000400002
(10-40),(9-21),(29-31)
7000000300000410001
(4-8),(3-7)
7000000300000410002
(14-36),(1-39)
7000000300000440001
636013
7000000300000440002
7000000300000520001
7000000300000520002
(8-14),(17-23)
7000000300000550001
(1-15),2,2 
7000000300000550002
7000000300000570001
(4-38),(27-37)
7000000300000570002
(82-104),79
7000000300000600001
7000000300000600002
(2-62),9
7000000300000600003
7000000300000640001
7000000300000640002
7000000100000110001
634006
7017
69401000000
(9-31),(4-26)
7000000100000110002
634057
(85-171),(62-134)
7000000100000200001
634021
(27-47),(10-36)
7000000100000200002
634029
(49-83),(38-56)
7000000100000200003
634061
7000000100000600001
634040
(22-32),23
7000000100000600002
634063
(1-25),(4-38)
7000000100000650001
(27-65),(40-86)
7000000100000650002
634034
7000000100000760001
634062
(12-24),(9-15)
7000000100000760002
(1-87),(2-72)
7000000100000890001
634009
(89-221),(76-252)
7000000100000890002
634026
(13-17),(14-30)
7000000100001120001
634041
(34-76),(19-47)
7000000100001120002
(3-11),(2-12)
7000000100001120003
(1-43),(2-30)
7000000100001400001
634012
7000000100001400002
(57-67),(68-78)
7000000100001510001
7000000100001510002
7000000100001510003
(21-49),(22-60)
7000000100001510004
(52-86),51
7000000100001530001
634059
(4-10),(16-38),(46-50)
7000000100001530002
7000000100001650001
(17-115),(20-66)
7000000100001650002
634003
7000000100001650003
(16-20),24,26,34,36,(56-62)
7000000100001720001
17,27,29,31,(35-41),(45-51),57,59
7000000100001720002
(3-13),(4-12)
7000000100001720003
(63-69)
7000000100001730001
634027
(11-33),(6-32)
7000000100001800001
(34-64),(35-67)
7000000100001800002
65,248/9,(79-93),(68-76)
7000000100001870001
(7-59),(2-56)
7000000100001870002
(34-44),(33-37)
7000000100001890001
(2-32),(3-31)
7000000100001890002
(3-15),(10-16)
7000000100002270001
634031
7000000100002270002
7000000100002400001
7000000100002400002
(130-214),(173-181)
7000000100002410001
(69-91),(80-128)
7000000100002410002
(1-23),(2-60)
7000000100003150001
634049
7000000100003150002
7000000100003150003
7000000100003170001
7000000100003170002
(32-70),(23-47)
7000000100003170003
1,19,(2-36)
7000000100003230001
(87-93),99,(92-100)
7000000100003230002
(113-151),(96-98)
7000000100003280001
(62-78),(71-109)
7000000100003280002
111,(80-94)
7000000100003280003
(1-17),(4-8),(57-67),(26-60)
7000000100003280004
7000000100003340001
22,(32-40),(46-48),(54-56)
7000000100003340002
21,(25-33),(37-41),49,51
7000000100003340003
(53-65),(58-68)
7000000100003340004
(9-37),(4-54)
7000000100003480001
(64-70),(61-77)
7000000100003480002
(39-59),(56-62)
7000000100003480003
7000000100003600001
(9-25),(6-16)
7000000100003600002
7000000100003680001
(101-151),(116-150),114 
7000000100003680002
(65-99),(72-114)
7000000100003680004
(35-63),(16-70)
7000000100003680005
(17-27),(22-26)
7000000100003840001
(2-16),(3-15)
7000000100003840002
634050
7000000100003890001
(15-35),(16-30)
7000000100003890002
7000000100003910001
(6-14),(3-5)
7000000100003910002
7000000100004020001
7000000100004020002
(63-143),(36-106)
7000000100004070001
7000000100004070003
11,(39-61),(2-34)
7000000100004070004
1,3,(2-14)
7000000100004100001
(17-49),(22-32)
7000000100004120001
(115-265),(82-210)
7000000100004120002
(269-283),(212-258)
7000000100004120003
634024
1,3,9,15,(2-12)
7000000100004120004
634028
14,16,(34-80),(55-111)
7000000100004120005
34,(15-17),31
7000000100004140001
(1-81),(2-82)
7000000100004310001
(89-139),(84-102)
7000000100004310002
(6-8),77
7000000100004320001
(27-33),(50-54)
7000000100004610001
(1-23),(46-48)
7000000100004610002
(68-76),(35-41)
7000000100004610003
(47-97),(22-46)
7000000100004650001
7000000100004650002
634015
(1-45),(2-20)
7000000100004650003
(45-111),(16-82)
7000000100004740001
(2-8),(15-43),7
7000000100004740002
14,28
7000000100004750001
(1-13),(2-12),16,18
7000000100004750002
7000000100004970001
(4-46),(1-15)
7000000100004970002
1,1,1,(35-61),(2-42)
7000000100005010001
7000000100005010002
7000000100005110001
(2-92),(21-109)
7000000100005110002
111
7000000100005140001
7000000100005140002
(24-78),(97-125)
7000000100005140003
(42-60),(9-39)
7000000100005180001
1,7,(2-20)
7000000100005180002
(21-39),(6-32)
7000000100005340001
38,(43-45)
7000000100005340002
7000000100005750001
7000000100005950001
(4-38),1
7000000100005950002
7000000100006130001
(14-30)
7000000100006130002
7000000100006270001
(63-67),50/1,50/2
7000000100006270002
7000000100006300001
(7-35)
7000000100006300002
7000000100006390001
(41-89)
7000000100006390002
(50-64),(65-73)
7000000100006410001
(2-48),(5-55)
7000000100006410002
(67-83),(91-111),31,33
7000000100007050001
(40-92),(102-114)
7000000100007050002
(1-13),10
7000000100007050003
(25-27),(18-20),(24-38)
7000000100007050004
(1-5),(2-42)
7000000100007090001
(11-35),(44-50)
7000000100007090002
(25-59),(24-50)
7000000100007120001
(58-114),(61-119)
7000000100007120002
7000000100007120003
7000000100007630001
(10-14),(13-15)
7000000100007630002
(61-117),(70-106)
7000000100007760001
(1-59),(2-68)
7000000100007760002
(29-61),(32-54)
7000000100007840001
(3-27),(2-28)
7000000100007840002
7000000100007940001
(14-40)
7000000100007940002
16,19
7000000100008030001
7000000100008160001
21/1,21/2,21/3,(2-18),(1-19)
7000000100008180001
(40-56),(21-25)
7000000100008180002
(27-37),(58-68)
7000000100008180003
7000000100008270001
(35-55),(20-50)
7000000100008270002
(112-240),(97-213)
7000000100008330002
(5-43),(4-48)
7000000100008330003
7000000100008330004
(55-87),(86-102)
7000000100008330005
(65-85),(30-40),(48-54),(94-96),127
7000000100008560001
(1-63),(2-28)
7000000100008560002
(115-123),113
7000000100008560003
85/2,(87-113)
7000000100008560004
53,55,(60-64)
7000000100008680001
7000000100008680002
(40-78)
7000000100008840001
7000000100008840002
7100000100000030001
300041
7107
70401380000
(51-71),(66-88)
7100000100000030002
7106
70401375000
73,81,(90-94)
7100000100000030003
300034
7100000100000100001
300012
(13-15),(12-24)
7100000100000100002
(54-66)
7100000100000100003
7104
70401368000
(17-31),(26-52)
7100000100000100004
7100000100000140001
(70-92)
7100000100000140002
7100000100000140003
300028
(102-120)
7100000100000140004
300026
7100000100000140005
(59-99),(52-68)
7100000100000140006
7100000100000140007
(1-89),(2-118)
7100000100000200001
(91-105),(120-128)
7100000100000200002
(107-117),(130-146)
7100000100000200003
,(54-998)
7100000100000220001
7100000100000220002
2,4,5
7100000100000380001
,(6-998)
7100000100000380002
300008
7100000100000610001
7100000100000610002
7100000100000980001
(47-57)
7100000100000980002
(1-133),(2-12)
7100000100001070001
(141-163),(58-68)
7100000100001070002
(14-56),(70-150)
7100000100001070003
(135-139)
7100000100001070004
1-23,25
7100000100001210001
(27-55),(24-66)
7100000100001210002
7100000100001210003
7100000100001250001
3-999
7100000100001250002
7100000100001390001
300053
7105
70401373000
(27-85),(24-84)
7100000100001390002
300021
89-91
7100000100001390003
300031
1-9,11-15
7100000100001420001
10,19-37
7100000100001420002
300010
(1-41),(2-56)
7100000100001440001
300016
(47-71),(58-80)
7100000100001440002
300027
(1-77),(2-84),(88-110)
7100000100001760001
300001
(111-175),(152-178)
7100000100001760002
(79-109),(112-150),86
7100000100001760003
300040
7100000100001810001
(37-43),(38-46)
7100000100001810002
7100000100002210001
(133-147),(130-136)
7100000100002210002
7100000100003120001
7100000100003120002
7100000100003260001
300013
7100000100003260002
(1-15),(2-98)
7100000100003280001
(93-143),(100-128)
7100000100003280002
7100000100003280003
(145-153)
7100000100003280004
7100000100003290001
7100000100003290002
7100000100003300001
34
7100000100003300002
7100000100003300003
7100000100003310001
(7-15),(12-26),120-136
7100000100003310002
7100000100003320001
(135-199),(134-166)
7100000100003320002
(5-27),(14-52)
7100000100003320003
7100000100003340001
(24-90)
7100000100003340002
7100000100003360001
(11-29),(4-30)
7100000100003360002
7100000100003370001
7100000100003370002
7100000100003420001
(18-32),(15-29)
7100000100003420002
(11-23),(12-48)
7100000100003430001
(25-37),(50-62)
7100000100003430002
(2-28),(1-35)
7100000100003450001
(30-50),(37-63)
7100000100003450002
7100000100003490001
(8-20),(9-21)
7100000100003490002
7100000100003500001
(25-33),(38-58)
7100000100003500002
(15-23),(2-36)
7100000100003500003
(1-15),2,4
7100000100003510001
17,(6-16)
7100000100003510002
(19-55),(18-30)
7100000100003510003
7100000100003530001
(9-13),14-20
7100000100003530002
(5-7),(10-12)
7100000100003530003
7100000100003550001
(17-47),(26-40)
7100000100003550002
7100000100003550003
(2-20),(3-25)
7100000100003560001
(22-94)
7100000100003560002
(96-104)
7100000100003560003
7100000100003580001
(15-23),(20-26)
7100000100003580002
7100000100003590001
(21-33),(18-30)
7100000100003590002
7100000100003610001
(17-29),(12-24)
7100000100003610002
7100000100003620001
7100000100003620002
7100000100003640001
7100000100003640002
(2-8),18,20,63/28,12/39,12,1
7100000100003770001
300002
7103
70401364000
(116-148),(187-207),3,5,22,24
7100000100003770002
300044
7100000100003780001
300062
1 ,1¢,1¥,1¤,1¦
7100000100003780002
7100000100003800001
49-499
7100000100003800002
300004
(21-61),11,(20-56)
7100000100003810001
70,72ª,(115-119),72,179
7100000100003810002
(213-247),(172-224)
7100000100003810003
7100000100003810004
300057
7100000100003840001
(25-39),(30-36),(208-300),(197-285)
7100000100003840002
(3-23),(4-26)
7100000100003850001
134
7100000100003850002
(201-217),(144-164)
7100000100003850003
(4-28),(5-29)
7100000100003890001
33,48,49,50,52,56,60,64,10,62
7100000100003890003
(1-65),(2-80)
7100000100003900001
(69-109),(84-124)
7100000100003900002
(17-31),(2-40),(1-13),51,60,61
7100000100003910002
(4-24),(11-15),(101-129),(118-172)
7100000100003920001
(58-82),(49-85)
7100000100003920002
(1-49),(2-4),20,22,54
7100000100003960001
(167-191),(226-232)
7100000100003960002
220,224,226
7100000100003960003
(1-43),(57-73),(2-44),(60-80)
7100000100003980001
(48-56),(45-53)
7100000100003980002
(148-154)
7100000100004000001
1,(3-13),(4-88)
7100000100004000002
(5-25)
7100000100004010001
(4-14),(31-61)
7100000100004010002
1,(6-76),9,17,19,(23-35),(55-63)
7100000100004020001
(65-69),(92-168),139,174,176
7100000100004020002
17,(27-51),(12-22),(145-171)
7100000100004030001
7100000100004030002
(19-25)
7100000100004030003
(225-263),(210-262)
7100000100004030004
7100000100004030005
(1-31),35ª,37ª,35,37
7100000100004060001
(2-28),(32-36)
7100000100004060002
(1-49),(10-48)
7100000100004070001
(213-301),(188-308)
7100000100004070003
300022
(50-82),(132-186)
7100000100004070004
(77-101),(145-211)
7100000100004070005
7100000100004090001
(49-61),(54-62)
7100000100004090002
300020
7100000100004110001
(37-59),(44-56)
7100000100004110002
7100000100004140001
7100000100004140002
(3-17),(2-46),(119-147),(58-74)
7100000100004160001
7100000100004160002
(50-56),76,78
7100000100004160003
(2-40),35,39,1,9
7100000100004180001
146,169
7100000100004180002
(175-219),(148-184),144
7100000100004180003
(25-33),(32-36),(103-135)
7100000100004200001
(4-30),(7-21)
7100000100004200002
(1-17),(47-87),(76-86),(2-18)
7100000100004210001
(21-37),(20-46)
7100000100004210002
7100000100004230001
(41-71),(56-88)
7100000100004230002
(181-209),(204-228)
7100000100004230003
(1-113),(2-164)
7100000100004280001
300005
(117-153),(170-180)
7100000100004280002
300036
(4-28),(9-15)
7100000100004380001
(32-104),(21-91)
7100000100004380002
7100000100004610001
(52-90),(49-79)
7100000100004610002
7100000100004660001
(57-83),(50-86)
7100000100004660002
50,56
7100000100004730001
2-35
7100000100004730002
(1-19),(28-38),91,2,14
7100000100004740001
(52-94),17,21,31
7100000100004740002
7100000100004920001
(11-19),(16-26)
7100000100004920002
(21-27),(16-20)
7100000100005000001
7100000100005030001
41-49
7100000100005030002
7100000100005050001
300039
7100000100005050002
7100000100005060001
(15-23),(12-26)
7100000100005060002
2-17,19
7100000100005070001
18,20,21-29
7100000100005070002
7100000100005080001
7100000100005080002
7100000100005090001
7100000100005090002
(16-32)
7100000100005090003
7100000100005090004
2,40
7100000100005260001
3-9,10-16,24-30,31-39
7100000100005260002
7100000100005480001
12-16,76-82
7100000100005480002
,(2-22),(52-998)
7100000100005710001
300024
7100000100005710002
7102400100000510001
301247
7151
7118
70432000000
27-51
7102400100000510002
301246
1-10,12,14,15,16
7102400100000830001
301241
11,13,14,16
7102400100000830002
40-60
7102400100000870002
301245
7102400100000870003
7102400100001170001
7102400100001170002
301244
1-45,47
7102400100001260001
46,48-61
7102400100001260002
301243
7102400100001280001
37,43,45
7102400100001280002
7102400100001340001
301248
(1-13),15-50
7102400100001340002
1-32,(33-39),41-59
7102400100001560001
(34-40),44,(61-73),77
7102400100001560002
7102400100001630001
7102400100001630002
(14-32),(27-47)
7102400100001720001
53,61,65,67,69,71,73
7102400100001720005
(1-59),(2-48)
7102400100001850001
54,56,58,60-73
7102400100001850002
14-37
7102400100002100001
7102400100002100002
(1-135),(2-128)
7200800000100010001
627300
7214
71218551000
(137-189),(130-190)
7200800000100010002
627303
(3-59),(2-70)
7200800000100050001
(67-169),(74-170)
7200800000100050002
627302
(1-67),(4-54)
7200800000100060001
7200800000100060002
(3-119),(4-140)
7200800000100190001
(125-189),(144-190)
7200800000100190002
(1-121),(2-126)
7200800000100200001
(127-189),(130-190)
7200800000100200002
(3-11),(2-8)
7200800000100230001
(13-29),(20-30)
7200800000100230002
(11-121),(2-120)
7200800000100390001
(125-189),(124-190)
7200800000100390002
7200800000100430001
(57-71),(50-70)
7200800000100430002
(3-51),(2-58)
7200800000100440001
(61-179),(62-182)
7200800000100440002
(3-59),(8-62)
7200800000100740001
(61-189),(66-192)
7200800000100740002
175,175,176-999
7200900100000190001
627143
7215
71403000000
(1-69),(2-70)
7200900100000190002
627144
(121-173),(134-162),132,132
7200900100000190003
627141
(71-119),(72-132)
7200900100000190004
627140
7200900100000470001
(57-99),(42-100)
7200900100000470002
(1-107),(1-102)
7201100100000040001
627756
7205
71405000000
(111-113),(106-110)
7201100100000040002
627753
28,43-85
7201100100000270001
91-119
7201100100000270002
627754
(3-23),(4-14)
7201100100000270003
(3-79)
7201100100000490001
(8-82)
7201100100000490002
7201100100000500001
(21-33),(22-32)
7201100100000500002
43-101
7201100100000500003
7201100100000510001
627750
(157-221),(148-212)
7201100100000510002
(79-155),(62-144)
7201100100000510003
7201100100000520001
(21-51),(22-48)
7201100100000520002
(50-84),(33-47)
7201100100000530001
627759
(1-31),(2-48)
7201100100000530002
627755
(1-117),(2-146)
7201100100000590001
(119-183),(148-200)
7201100100000590002
7201100100000710001
627751
(15-71),(18-66)
7201100100000710002
(73-89),(82-96)
7201100100000860002
7201100100000890001
(61-171),(60-196)
7201100100000890002
(1-99),(2-94)
7201100100000990001
(98-132),(101-173)
7201100100000990002
7201100100001050001
(1-31),(4-38)
7201100100001050002
(35-59),(40-66)
7201100100001050003
(61-77),(68-100)
7201100100001050004
(5-61),(2-72)
7201100100001090001
(63-81),(74-114)
7201100100001090002
7201100100001100001
(153-195),(140-166)
7201100100001100002
(53-151),(56-136)
7201100100001100003
(3-67),(10-60)
7201100100001220001
7201100100001320001
(31-85),(32-68)
7201100100001320002
7201100100001430001
(69-85),(66-74)
7201100100001430002
7201100100001560001
(29-43),(26-72)
7201100100001560002
(87-133),(116-150)
7201100100001560003
7201100100001570001
(149-205),207,(100-166)
7201100100001570002
(209-219),(168-170),207
7201100100001570003
(87-147),(60-98)
7201100100001570004
7201100100001810001
(41-79),(52-100)
7201100100001810002
(1-79),(2-76)
7201100100001820001
(81-91),(80-92)
7201100100001820002
7201100100001850001
(31-87),(36-90)
7201100100001850002
(1-41),(4-32)
7201100100001870001
(117-191),(68-118)
7201100100001870002
(43-115),(36-66)
7201100100001870003
(1-91),(2-46)
7201100100001890001
(93-119),(54-88)
7201100100001890002
7201100100001940001
(11-23),(12-22)
7201100100001940002
(1-45),(2-46)
7201100100002140001
(47-67),(48-52)
7201100100002140002
76,76,76,76,93,93,99,100,101
7201100100002210001
627705
7201100100002210002
(1-43),(40-98)
7201100100002300001
(71-109),(102-124)
7201100100002300002
7201100100002300003
93,(98-108)
7201100100002640001
(3-89),(2-94)
7201100100002640002
7201100100002870001
7201100100002870002
(1-63),(2-58),66
7201100100002990001
(67-79),(82-98)
7201100100002990002
(1-31),(2-52)
7201200000100210001
627420
7218
71230832001
(1-115),(2-102)
7201200000100300001
(54-90)
7201200002400100001
627429
71230833001
(117-291),(104-298)
7201200002400130001
1-247,249,251
7201400000100630001
627070
7220
71234848001
248,250,252-300
7201400000100630002
627072
(1-81),(2-60),62 
7200000200000040001
626152
7206
71410000000
(83-121),(64-98)
7200000200000040002
626150
(1-87),(2-102)
7200000200000110001
626156
(89-169)
7200000200000110002
626153
(103-141),(94-138)
7200000200000140001
7200000200000140002
(134-152),(127-145)
7200000200000170001
(1-109),(2-132)
7200000200000170002
(72-208),(67-175)
7200000200000260001
7200000200000260002
(28-40),(35-45)
7200000200000320001
(42-58),(51-77)
7200000200000320002
(39-43),(40-54)
7200000200000780001
(1-27),(57-75),91,(2-36)
7200000200000780002
(75-121),(68-118)
7200000200000790001
(21-67),(20-64)
7200000200000790002
(49-125),(64-126)
7200000200001060001
(1-47),(2-62)
7200000200001060002
(101-151),(94-122)
7200000200031610001
(1-99),(2-92)
7200000200031610002
(66-120),(51-121)
7200000200031830001
(1-49),(2-62),64
7200000200031830002
7202100100000060001
627011
7207
71415000000
(39-999),(46-998)
7202100100000060002
627016
(1-33),(2-16)
7202100100000240001
7202100100000240002
627018
7202100100000260001
627010
7202100100000260002
627014
7202100100000420001
7202100100000420002
7202100100000480001
(22-98),(13-99)
7202100100000480002
(3-63),(2-34)
7202100100000520001
627013
(65-99),(36-98)
7202100100000520002
627017
7202100100000530001
7202100100000530002
(29-107),(44-122)
7202100100000530003
(31-49),(50-68)
7202100100000570001
7202100100000570002
7202100100000610001
(45-71),(54-98)
7202100100000610002
7202100100000730001
(1-53),(1-10)
7202100100000770001
(55-57),(12-998)
7202100100000770002
7202100100000790001
30,32,(63-999)
7202100100000790002
7202100100000890001
(43-79),(36-78)
7202100100000890002
7202100100000920001
7202100100000920002
(1-75),(2-78)
7202100100000960001
(77-999),(80-998)
7202100100000960002
(1-121),(2-128)
7202100100000990001
(123-163),(130-182)
7202100100000990002
(165-183),(184-998)
7202100100000990003
(35-39)
7202100100001020001
(43-51),(2-64),15,25,33
7202100100001020002
(1-47),(2-124)
7202100100001040001
(149-207),(126-186)
7202100100001040002
(209-267),(188-246)
7202100100001040004
(1-177),(2-156)
7202100100001060001
(179-219),(158-202)
7202100100001060002
(221-279),(204-299)
7202100100001060003
(75-999),(80-998)
7202100100001070001
7202100100001070002
(2-998),(1-999)
7202100100001120001
(1-157),(2-182)
7202100100001230001
(159-211),(184-218)
7202100100001230002
(213-999),(220-998)
7202100100001230003
(23-35),(52-998)
7202100100001320001
(1-21),(2-50)
7202100100001320002
(59-97),(60-90)
7202100100001410001
7202100100001410002
(101-199),(108-200)
7300000100000700001
432063
7325
73401384000
7300000100000700002
7326
73401365000
1-17,19-40,42,44,46-999
7300000100002090001
432035
18,41,43,45
7300000100002090002
432012
7300000100002150001
432030
(43-999),(48-998)
7300000100002150002
432027
7300000100002240001
432071
7300000100002240002
7300000100002270001
(31-43),44-999
7300000100002270002
20,(21-999)
7300000100002460001
432044
(1-15),(2-18),(22-998)
7300000100002460002
35-999,(28-34)
7300000100002480001
7300000100002480002
7300000100002740001
(9-23),24-999
7300000100002740002
(27-81),80,82-999
7300000100002760001
(2-78),(1-25)
7300000100002760002
7300000100002780001
7300000100002780002
7300000100003030001
7300000100003030002
432006
7300000100003070001
7300000100003070002
(1-79),(2-200)
7300000100003160001
432045
7327
73401373000
7300000100003160002
432054
7300000100003270001
432026
7300000100003270002
432008
7300000100003380001
7300000100003380002
7300000100003400001
(19-37),38-999
7300000100003400002
7300000100003440001
432066
(22-38),39-999
7300000100003440002
7300000100003770001
(111-167),168-999
7300000100003770002
(53-109),(70-166)
7300000100003770003
,(10-998)
7300000100003810001
432007
7328
73401368000
7300000100003810002
432031
7300000100003830001
,(115-999)
7300000100003830002
432018
,(14-998)
7300000100003920001
7300000100003920002
7300000100003970001
7300000100003970002
7300000100004060001
(146-198),199-999
7300000100004060002
(20-140),(21-197)
7300000100004060003
7300000100004350001
7300000100004350002
(1-81),(2-98)
7300000100004470001
(83-999),(100-998)
7300000100004470002
(1-35),(2-76)
7300000100004520001
(37-999),(78-998)
7300000100004520002
7300000100004590001
(2-28),30-999
7300000100004590002
7300000100004720001
7300000100004720002
7300000100004780001
(17-99),(30-998)
7300000100004780002
7300000100004830001
7300000100004830002
(1-999),2,4,6,8,(10-998)
7300000100004880001
2,4,6,8
7300000100004880002
50-999,(41-49)
7300000100004900001
7300000100004900002
43-999,(32-42)
7300000100004990001
(1-41),(2-30)
7300000100004990002
7300000100005170001
15,17-999
7300000100005170002
1-27,30-999
7300000100005210001
28,29
7300000100005210002
1-69,72,(71-79),81-83,85-999
7300000100005310001
70,(74-80),84
7300000100005310002
130
7300000100005420001
432013
7300000100005420002
130/2,(109-131),132-999
7300000100005420003
(53-107),(70-128)
7300000100005420004
(1-37),(2-68),68
7300000100005590001
7300000100005590002
(114-998)
7300000100005590003
7300000100005590004
7300000100005670001
121-999
7300000100005670002
(1-41),(18-48)
7300000100005710001
63-94
7300000100005710002
7300000100005770001
(12-100),(15-99)
7300000100005770002
1-26,28-39,49-999
7300000100005810001
27,40-48
7300000100005810002
7300000100005820001
(7-29),30-999
7300000100005820002
(1-17),2
7300000100005910001
(19-999),(4-998)
7300000100005910002
7300000100006210001
7300000100006210002
(1-157),(2-108)
7300000100006480001
(110-158),159-999
7300000100006480002
39-999,(12-26)
7300000100006540001
7300000100006540002
(1-3),(2-26)
7300000100006650001
(5-27),28-999
7300000100006650002
7300000100006690001
7300000100006690002
43-999,(36-42)
7300000100006700001
7300000100006700002
7300000100006890001
(61-67),(66-70)
7300000100006890002
1-16,(25-999),(18-20),(30-998)
7300000100007320001
(17-23),(22-28)
7300000100007320002
100-999
7300000100007660001
432049
(1-15),(2-78)
7300000100007660002
(19-29),86,88,90
7300000100007660003
(31-99),(80-84),(92-98)
7300000100007660004
7300000100007960001
7300000100007960002
7300000100008360001
7300000100008360002
7300000200000030001
433503
7302
73405000000
(148-190),(147-191)
7300000200000030002
433511
(18-146),(21-145)
7300000200000030003
433508
(2-16),(1-47)
7300000200000040001
(18-216),(49-999)
7300000200000040002
433502
7300000200000170001
(68-98),(63-99),106
7300000200000170002
433501
7300000200000350001
433514
20-60
7300000200000350002
433509
7300000200000360001
(2-52),(1-55)
7300000200000360002
(54-130),(57-135)
7300000200000360003
7300000200000490001
(54-94),(55-93)
7300000200000490002
56,58,69,71
7300000200000520001
7300000200000520002
(1-25),2,4,6,8,10,12
7300000200000530001
433507
(27-39),14,16
7300000200000530002
433512
(41-49),18
7300000200000530003
433504
7300000200000630001
433505
(1-19),(18-22),12
7300000200000630002
433513
7300000200000750001
64-68
7300000200000750002
7300000200000840001
(54-72),(61-71)
7300000200000840002
1-94
7300000200000890001
95,96
7300000200000890002
(1-149),(2-102)
7300000200000900001
(153-213),(104-210)
7300000200000900002
(215-335),(220-396)
7300000200000900003
7300000200000920001
(147-227),(148-228)
7300000200000920002
(2-42),3
7300000200000930001
433506
1,(5-99),(44-98)
7300000200000930002
(1-7),(2-20)
7300000200000960001
7300000200000960002
(27-43),(22-50)
7300000200000960003
(45-65)
7300000200000960004
18-62
7300000200001210001
64-87
7300000200001210002
7300000200001270001
(13-47),(12-44)
7300000200001270002
(2-44),(1-53)
7300000200001320001
(46-76),(63-73)
7300000200001320002
28-70
7300000200001380001
(1-11),(2-26),74
7300000200001380002
(1-27),(2-52)
7300000200001700001
(54-114),(29-111)
7300000200001700002
(1-51),(2-56)
7300000200001790001
(58-100),(53-95)
7300000200001790002
(2-12),(1-13),(77-131)
7300000200001870001
(14-34),(15-35)
7300000200001870002
(50-76),(41-75)
7300000200001870003
7300000200002040001
(19-153),(38-166)
7300000200002040002
1,3,(15-37),(2-72)
7300000200002090001
7300000200002090002
(85-93),(114-130)
7300000200002090003
(78-112),43,(51-63)
7300000200002090004
7300000200002410001
(33-157),(40-116)
7300000200002410002
(69-107),(54-86)
7300000300000020001
433750
7306
7301
73204501000
(1-67),(2-52)
7300000300000020002
433752
(1-69),(2-84)
7300000300000120001
(71-95),(86-110)
7300000300000120002
(11-21),(10-22)
7300000300000140001
(1-9),(2-8),44,46,48
7300000300000140002
7300000300000150001
(9-35),(10-34)
7300000300000150002
(1-93),(2-98)
7300000300000370001
(95-101),(100-168)
7300000300000370002
(27-135),(2-70)
7300000300000460001
433753
7300000300000460002
(59-105),(48-56)
7300000300000990001
(3-51),(2-44),46
7300000300000990002
(1-21),(4-18)
7400000100000070001
454021
7448
75401366000
7400000100000070002
454001
7447
75401364000
(1-25),(4-16),18
7400000100000080001
454038
7450
75401372000
7400000100000080002
454025
(19-43),(2-52)
7400000100000110001
454081
(71-91),(54-66)
7400000100000110002
7452
75401380000
(1-41),(32-50)
7400000100000200001
454010
7449
75401368000
7400000100000200002
454078
7400000100000480001
454007
7400000100000480002
454074
(55-83),(70-118)
7400000100000560001
(2-68),(1-53)
7400000100000560002
7400000100000560003
454071
(107-119),(120-124),136
7400000100000560004
(37-89),(16-52)
7400000100000620001
7400000100000620002
7400000100000620003
454077
7400000100000620004
7400000100000620005
7400000100000630001
(15-99),(22-100)
7400000100000630002
454052
7400000100000680001
454129
(31-59),(32-58)
7400000100000680002
454046
7400000100000690001
454108
(2-4),(8-60),(3-59)
7400000100000690002
(62-242),(61-89),(93-241)
7400000100000690003
91,(243-299),(244-300)
7400000100000690004
7400000100000740001
454119
(9-29),(12-30)
7400000100000740002
7400000100001030001
454048
7451
75401376000
(49-101),(42-100)
7400000100001030002
454087
7400000100001040001
(17-25),(32-40)
7400000100001040002
(27-41),(42-44)
7400000100001040003
(67-107)
7400000100001140003
(1-109),(2-118)
7400000100001420001
(111-199),(120-200)
7400000100001420002
(1-29),(4-68)
7400000100001470001
2,2 ,2¢
7400000100001470002
7400000100001500001
7453
75401386000
(1-65),(74-100)
7400000100001500002
454091
(1-13),(4-6)
7400000100001680001
454126
2,2,15
7400000100001680002
(1-83),(2-48)
7400000100001790001
(50-52)
7400000100001790002
7400000100001800001
(27-57),(26-44)
7400000100001800002
7400000100001880001
7400000100001880002
(16-72)
7400000100001880003
7400000100001890001
(2-16),(1-29)
7400000100001890002
454014
7400000100001890003
(2-62),(1-61)
7400000100002010001
(64-84),(63-83)
7400000100002010002
(86-112),(85-89)
7400000100002010003
454085
(1-37),(4-24)
7400000100002030001
(39-55),(52-64)
7400000100002030002
7400000100002030003
7400000100002030004
7400000100002110001
454047
7400000100002110002
(1-21),(40-48)
7400000100002160001
6¯
7400000100002160002
(25-79),(50-134)
7400000100002160005
(2-38),51,52,60,61,67,71,75,80
7400000100002160006
7400000100002230001
(9-55),(10-50)
7400000100002230002
(57-77),(52-64)
7400000100002230003
(1-25),(2-64)
7400000100002240001
(27-59)
7400000100002240002
(66-90),(61-99)
7400000100002240003
7400000100002360001
(64-70),(79-89)
7400000100002360002
(16-40),(19-35)
7400000100002360003
(37-67),(42-62)
7400000100002360004
(93-999)
7400000100002360005
7400000100002420001
(27-43),(28-44)
7400000100002420002
(45-57),(46-50)
7400000100002420003
(1-57),(2-60)
7400000100002630001
(59-91),(62-100)
7400000100002630002
(102-104)
7400000100002630003
7400000100002740001
7400000100002740002
(51-91),(26-96)
7400000100002740003
(93-125),(98-132)
7400000100002740004
(1-33),(14-48)
7400000100002790001
7400000100002790002
7400000100002870001
(15-27)
7400000100002870002
7400000100002960001
(59-107),(68-110)
7400000100002960002
(1-23),(4-30)
7400000100003080001
(25-53),(32-52)
7400000100003080002
7400000100003110001
(1-37),6,60
7400000100003110002
(3-37),(4-34)
7400000100003420001
(39-59),(36-58)
7400000100003420002
(1-33),(4-32)
7400000100003490001
(35-65),(34-70)
7400000100003490002
7400000100003710001
454053
7400000100003780001
(25-43),(22-36)
7400000100003780002
(1-101),(44-118)
7400000100003830001
454084
7400000100003830002
454008
(3-43),(16-52)
7400000100003840001
(45-73),(54-88)
7400000100003840002
(1-27),(2-78)
7400000100003930001
(135-177),(80-116)
7400000100003930002
7400000100003970001
454106
(41-999),(48-998)
7400000100003970002
454018
(9-29),(24-58)
7400000100004010001
(70-72)
7400000100004010002
(1-73),(32-86)
7400000100004140001
7400000100004140002
(1-67),(2-38)
7400000100004180001
(40-108),(69-103)
7400000100004180002
(110-116),(125-137)
7400000100004180003
7400000100004220001
(25-29),(32-36)
7400000100004220002
(70-120)
7400000100004220003
(3-15),(2-16)
7400000100004270001
(31-45),(22-48)
7400000100004270002
454138
(47-65),(50-88)
7400000100004270003
7400000100004310001
7400000100004310002
(1-17),(2-38)
7400000100004350001
454012
7400000100004350002
(40-44),(49-51)
7400000100004350003
7400000100004350004
454135
(48-60),(35-37)
7400000100004350005
7400000100004480001
(42-998),(55-73),(103-999)
7400000100004480002
(1-19),(20-50)
7400000100004510001
7400000100004510002
(21-39),(52-72)
7400000100004510003
(4-6),(9-69),(36-50)
7400000100004540001
(70-74),(105-109)
7400000100004540002
(1-59),(42-86)
7400000100004550001
454006
(135-167)
7400000100004550002
(61-111),(88-168)
7400000100004550003
7400000100004590001
(28-82),41
7400000100004590002
(1-87),(2-50)
7400000100004660001
(52-68),(89-91)
7400000100004660002
7400000100004780001
(8-32),(31-39),(60-64),(71-75)
7400000100004780002
(34-58),(41-69),(77-81)
7400000100004780003
(1-63),(2-20)
7400000100004850001
(65-83),(30-38)
7400000100004850002
7400000100004890001
(2-88),(11-75)
7400000100004890002
(13-59),(16-44)
7400000100004910001
(61-79),(76-100)
7400000100004910002
(81-99),(102-106)
7400000100004910003
7400000100004940001
(31-55),(32-68)
7400000100004940002
7400000100004960001
(21-27),(22-34)
7400000100004960002
(11-107),(16-74)
7400000100005000001
(1-55),(32-80)
7400000100005060001
7400000100005060002
(21-53)
7400000100005080001
(2-26),(1-19)
7400000100005080002
(28-82),(55-67)
7400000100005080003
7400000100005080004
454080
(21-41),2
7400000100005180001
45-56
7400000100005180002
7400000100005190001
9,16-38
7400000100005190002
454092
7400000100005250001
(29-39),(26-34)
7400000100005250002
7400000100005450001
(37-91),(38-82)
7400000100005450002
(1-25),(2-120)
7400000100005690001
(154-192),(27-29)
7400000100005690002
1,3,(7-25),(22-48)
7400000100005840001
7400000100005840002
454139
5,(2-20)
7400000100005840003
7400000100005910001
(23-53)
7400000100005910002
7400000100006100001
(96-102)
7400000100006100002
125,169,171,212
7400000100006150001
(37-47),95-107,(38-54),164
7400000100006150002
7400000100006210001
7400000100006210003
(31-65),(54-70)
7400000100006210004
(1-79),(2-112)
7400000100006430001
(81-121),(114-176)
7400000100006430002
7400000100006540001
(37-65),(36-72)
7400000100006540002
7400000100006550001
(81-95),(64-78),(80-118)
7400000100006550002
(109-113),(122-146)
7400000100006550003
7400000100006810001
(29-69),(30-54)
7400000100006810002
7400000100007210001
7400000100007210002
(19-117)
7400000100007210003
7400000100007220001
(33-41),(20-48)
7400000100007220002
(51-59),(56-60)
7400000100007320001
(83-85),(82-84)
7400000100007320002
(1-51),(2-60)
7400000100007560001
(174-202)
7400000100007560002
7400000100007570001
(19-25),(28-32)
7400000100007570002
(1-49),(53-57),(61-999)
7400000100007740001
(10-76),51,59
7400000100007740002
(1-43),2
7400000100007780001
7400000100007780002
(1-59),(6-56)
7400000100008030001
(65-73),(60-70)
7400000100008030002
7400000100008160001
(37-55),(36-46)
7400000100008160002
7400000100008220001
7400000100008220002
454113
7400000100008260001
7400000100008260002
(61-157),(66-126)
7400000100008330001
7400000100008330002
(202-300),(251-303)
7400000100008330003
(159-173),(128-200)
7400000100008330004
(7-33),(2-32)
7400000100008390001
7400000100008390002
(34-36)
7400000100008390003
7400000100008400001
(3-25),(8-24)
7400000100008400002
7400000100008400003
7400000100008400004
1-3,(4-36)
7400000100008600001
(13-29),37
7400000100008600002
454003
7400000100008720001
7400000100008720002
(38-64),(51-71)
7400000100008720003
7400000100008720004
(78-86)
7400000100008720005
(1-69),(2-12)
7400000100008810001
(14-66),(71-137)
7400000100008810003
(1-77),(2-90)
7400000100008870001
(81-137),(94-132),(136-166)
7400000100008870002
7400000100008900001
(40-64),(33-127)
7400000100008900002
7400000100009030001
(25-33),(26-30),49,51
7400000100009030002
(1-25),(14-20)
7400000100009040001
(22-36),(27-37)
7400000100009040002
(2-28),(7-11)
7400000100009230001
(58-68)
7400000100009230002
7400000100009230003
7400000100009330001
(42-66)
7400000100009330002
(1-31),(10-54)
7400000100009390001
(33-49),(56-90),94
7400000100009390002
7400000100009440001
(11-43),(14-50)
7400000100009440002
(45-139),(56-126)
7400000100009440003
7400000100009450001
41-65
7400000100009450002
(1-21),(2-40)
7400000100009520001
(23-155),(42-100)
7400000100009520002
(1-109),(2-98)
7400000100009630001
(111-193),(102-156)
7400000100009630002
7400000100009650001
(13-71),(24-58)
7400000100009650002
7400000100009760001
(17-27),(31-999),(20-998)
7400000100009760002
7400000100009820001
(41-43)
7400000100009820002
(3-73),(4-76)
7400000100009910001
7400000100009910002
7400000100009910003
7400000100010000001
7400000100010000002
120-130
7400000100010040001
(3-41),(36-40)
7400000100010040002
(73-119),(72-118)
7400000100010040003
454090
(59-71),(42-70)
7400000100010040004
7400000100010060001
(37-49),(26-34)
7400000100010060002
7400000100010080001
(1-23),(57-59)
7400000100010080002
(25-55)
7400000100010080003
(1-197),(52-186)
7400000100010160001
7400000100010160002
(6-12),(13-19)
7400000100010250001
7400000100010250002
7400000100010580001
(63-73),(44-74)
7400000100010580002
(1-95),(2-84)
7400000100010630001
(86-998),(97-999)
7400000100010630002
7400000100010700001
(29-121),(42-130)
7400000100010700002
7400000100010750001
(9-11),(6-8)
7400000100010750002
(17-19),(2-20)
7400000100010820001
(21-23),(22-30)
7400000100010820002
7400000100010880001
(35-85),(38-90)
7400000100010880002
7400000100011000001
(14-20),(9-19)
7400000100011000002
7400000100011010001
(85-181)
7400000100011010002
(11-83),22
7400000100011010003
(183-185),(44-70)
7400000100011010004
(15-17),(22-24)
7400000100011050002
7400000100011090001
7400000100011140001
7400000100011140002
7400000100011160001
7400000100011160002
7400000100011320001
(39-99),(42-116)
7400000100011320002
(167-209),(148-188)
7400000100011440001
(1-77),(2-112)
7400000100011440002
(1-39),(6-68)
7400000100011480001
(41-63),(70-88)
7400000100011480002
7400000100011520001
(33-47)
7400000100011520002
(1-39),(14-76)
7400000100011660001
7400000100011660002
(1-65),(8-30)
7400000100011730001
(69-103),(32-58)
7400000100011730002
7400000100011740001
(25-67),(28-68)
7400000100011740002
(7-39),(6-18),(28-38)
7400000100011760001
7400000100011760002
(2-4),(1-3)
7400000100011760003
7400000100011770001
(57-81),(48-78)
7400000100011770002
(1-29),(12-16)
7400000100011800001
(55-77),(46-74)
7400000100011800002
(1-31),(8-14)
7400000100011810001
(43-51),(20-28)
7400000100011810002
7400000100011810003
(14-68),(13-47)
7400000100003710002
7400000100011050003
(1-83),(2-118)
7400000104100010001
7400000104100010002
(120-124),(107-111)
7400000104100010003
7400000500000460001
456055
7413
7406
75415000000
43-98
7400000500000460002
456141
7400000600000130001
456618
7411
75428000000
(39-999),(30-998)
7400000600000130002
456601
7400000600000230001
456620
(2-28),(1-23)
7400000600000230002
456623
7400000600000230003
456625
7,7,7,7,10
7400000600000250001
456604
(2-8),(9-13),(12-18)
7400000600000250002
7400000600000490001
(17-99),(24-98)
7400000600000490002
7400000600000500001
7400000600000590001
(19-25),27-99
7400000600000590002
7400000600000600001
7400000600000600002
7400000600000650001
7400000600000650002
456610
7400000600000650003
7400000600000680001
2,4-99
7400000600000680002
7400000600000780001
(2-30),(15-31)
7400000600000780002
37-40
7400000600000780003
456617
1-6,8-61,(63-69)
7400000600000990001
7400000600000990002
456600
(62-68),70-89
7400000600000990003
1-5,(6-14),16-27
7400000600001090001
(7-15),28-99
7400000600001090002
7400000600001170001
7400000600001170002
7400000600001190001
89
7400000600001190002
7400000600001360001
7400000600001360002
7400000600001530001
7400000600001530002
7400000600001530003
7400000600001530004
(6-18),19-34,(36-98)
7400000600001530005
40-64
7400000600001670001
65,65,66,67,67,68,69,69
7400000600001670002
(1-9),(2-28)
7400000600001720001
7400000600001720002
7400000600001930001
7400000600001930002
7400000600001930003
7400000600002200001
51-199
7400000600002200002
7400000600002290001
2,4-20,22
7400000600002290002
(21-41)
7400000600002290003
7400000600003070001
456653
7400000600003070002
456622
1-127
7400000600004660001
456607
7400000600004660002
456655
7400000900000030001
455047
7445
75438369000
7400000900000030002
455051
(37-67)
7400000900000030003
455034
(1-93),(2-96)
7400000900000120001
455030
7446
75438375000
(95-139),(98-138)
7400000900000120002
455025
(1-7),(8-12)
7400000900000440001
455045
(9-17),(16-18)
7400000900000440002
455049
7400000900000510001
455016
2¡,2¢,28,3/1
7400000900000510002
455010
(1-17),(2-80)
7400000900000600001
455017
7444
75438372000
7400000900000600002
455000
(82-144),29
7400000900000600003
455039
7400000900000660001
(33-41),(26-30)
7400000900000660002
455021
7400000900000680001
455044
7400000900000680002
455023
(45-73),(52-60)
7400000900000680003
7400000900000680004
455026
(1-11),14,6
7400000900000700001
455038
(19-51),(16-30)
7400000900000700002
(23-31),6,14
7400000900000740001
455001
(33-39),10
7400000900000740002
7400000900000840001
7400000900000840002
(26-98)
7400000900000840003
455037
(1-25),(4-14)
7400000900000930001
455007
(27-99),(32-78)
7400000900000930002
455011
7400000900001030001
(23-99),(2-98)
7400000900001030002
(9-93),(22-40)
7400000900001050001
(42-174),(95-237)
7400000900001050002
7400000900001110001
(9-19),(8-18)
7400000900001110002
7400000900001130001
7400000900001130002
7400000900001130003
(35-79),(38-122)
7400000900001240001
7400000900001240002
(75-83),(72-86)
7400000900001260001
(21-63),(20-66)
7400000900001260002
(10-16),(9-13)
7400000900001260003
7400000900001290001
7400000900001290002
7400000900001330001
(9-31),(10-32)
7400000900001330002
(33-77),(34-72)
7400000900001330003
7400000900001350001
455019
(29-45),(46-66)
7400000900001350002
(27-53),(26-64)
7400000900001370001
(109-125),(136-156)
7400000900001370002
(127-153),(158-170)
7400000900001370003
7400000900001370004
(155-183)
7400000900001370005
(185-209)
7400000900001370006
7400000900001370007
(108-134),(77-107)
7400000900001370008
(174-198)
7400000900001370009
(2-24),(11-25)
7400000900001370010
(74-84),(55-75)
7400000900001370012
(46-140)
7400000900001470001
(103-141),(142-250)
7400000900001470002
7400000900001550001
(49-113),(44-144)
7400000900001550002
7400000900001580001
(45-113),(42-118)
7400000900001580002
(1-33),123,(2-14),(22-24),(142-144)
7400000900001650001
(37-61),(32-58)
7400000900001650002
7400000900001660001
(11-45),(14-38)
7400000900001660002
(4-28),(1-15)
7400000900001750001
7400000900001750002
(19-51),(14-46)
7400000900001850001
(141-281),(156-164)
7400000900001850002
(89-93),(94-110)
7400000900001850003
112,(116-128),(95-103)
7400000900001850004
(48-64),(53-69)
7400000900001850005
7400000900001850007
(8-12),(7-17)
7400000900001850008
(66-68)
7400000900001850009
(3-35),(2-4)
7400000900001860001
(41-77),(36-98)
7400000900001860002
(37-39),(6-34)
7400000900001860003
7400000900001890001
(57-103),(58-106)
7400000900001890002
7400000900001910001
(56-142),(27-159)
7400000900001910002
7400000900001950002
(9-19),(2-20)
7400000900002120001
7400000900002120002
(11-23),(2-28)
7400000900002140001
(41-73),(30-62)
7400000900002140002
(1-89),(2-124)
7400000900002170001
(93-105),(126-154)
7400000900002170002
7400000900002220001
7400000900002220002
(25-49),(26-48)
7400000900002220003
(51-105)
7400000900002220004
7400000900002330001
(5-33),(8-80)
7400000900002330002
7400000900002360001
(5-31),(8-34)
7400000900002360002
(2-96),(1-49)
7400000900002510001
(98-138),(51-199)
7400000900002510002
(2-16),(1-13)
7400000900002690001
(18-28),(15-27)
7400000900002690002
7400000900002700001
(6-98),(11-107)
7400000900002700002
(19-21),(2-30)
7400000900002880001
(23-31),(34-46)
7400000900002880002
7400000900002970001
(39-59),(30-56)
7400000900002970002
(1-109),(2-50)
7400000900003170001
(111-123)
7400000900003170002
(125-143),(72-88)
7400000900003170003
(145-159),(90-108)
7400000900003170004
455036
(183-197)
7400000900003170005
(199-205)
7400000900003170006
(52-70)
7400000900003170008
(207-225),(174-184)
7400000900003170009
7400000900003190001
(19-55)
7400000900003190002
7400000900003190003
7400000900003250001
7400000900003280001
(12-58),(9-59)
7400000900003280002
7400000900003300001
(123-139),(126-146)
7400000900003300002
(87-109),(100-112)
7400000900003300003
(114-124)
7400000900003300004
(111-121)
7400000900003300005
(6-8),(9-17)
7400000900003390001
(19-31),35
7400000900003390002
(1-15),(23-31)
7400000900003450001
(22-30),(17-21)
7400000900003450002
7400000900003480001
7400000900003480002
(41-51),(40-42)
7400000900003480003
7400000900003480004
7400000900003480005
7400000900003540001
(74-162),(71-181)
7400000900003540002
(1-21),(14-22)
7400000900003550001
(2-12),(24-50)
7400000900003550002
(17-59),(28-68)
7400000900003630001
7400000900003630002
7400000900003700001
(33-93),(52-92)
7400000900003700002
455013
(1-27),(31-83),(2-56)
7400000900003720001
(60-90)
7400000900003720002
7400000900003730001
(11-23),(18-30)
7400000900003730002
(3-53),(2-46)
7400000900003860001
(55-117),(48-104)
7400000900003860002
(14-38)
7400000900003900001
7400000900003900002
(1-51),(8-52)
7400000900004010001
(54-60)
7400000900004010002
7400000900004030001
(17-93),(32-136)
7400000900004030002
455020
7400000900004040001
(2-126),(15-85)
7400000900004040002
(1-195)
7400000902300050001
7400000902300050002
455003
(11-35),(26-48)
7400000902400050001
7400000902400050002
7400000902600010001
7400000902600010002
1,2,3-30
7400001100000030001
456780
7422
75543000000
1,2
7400001100000030002
456784
3,4,6,10
7400001100000060001
456789
11-32
7400001100000060002
456785
32,34
7400001100000100001
456790
7400001100000100002
(36-60)
7400001100000100003
456787
(49-63)
7400001100000100004
7400001100000180001
21,25,27
7400001100000180002
1,3,5-20,22-24,32
7400001100000180003
1-8,12
7400001100000230001
9,11,13-42
7400001100000230002
456783
2-65
7400001100000240001
66-84,86,90
7400001100000240002
(3-9),4
7400001100000260001
8,10-27
7400001100000260002
4,5,9,20,22,(37-45),53 
7400001100000310001
(26-34),38
7400001100000310002
16,18
7400001100000310003
2-30
7400001100000380001
33-42
7400001100000380002
7400001100000390001
49-69
7400001100000390002
3-16,18,20
7400001100000400001
17,19,21-40
7400001100000400002
7400001100000440001
7400001100000440002
(30-54),(43-57)
7400001100000440003
2-32
7400001100000480001
35-58
7400001100000480002
7400001100000510001
12-48
7400001100000510002
7400001100000530001
25-57
7400001100000530002
3-10
7400001100000570001
11-22
7400001100000570002
15-32
7401700200000070001
456910
7417
75448000000
7401700200000070002
456912
8-43
7401700200000420001
456918
1-7,44-55
7401700200000420002
(8-20),21-59
7401700200000930001
1,4,6,(9-19)
7401700200000930002
7404200100000020001
456440
7420
75458000000
(9-37),(12-56)
7404200100000020002
456441
3-22
7404200100000210001
(23-27),(44-62)
7404200100000210002
32-38
7404200100000230001
(1-13),(12-30)
7404200100000230002
7404200100000530001
7404200100000530002
7404200100000570001
24-100
7404200100000570002
7404200100000620001
20-100
7404200100000620002
37-100
7404200100000800001
(7-35),(2-36)
7404200100000800002
7404200100001060001
456445
57,237,288,327
7404200100001060002
7404200100001650001
52,54-62
7404200100001650002
7404200100001660001
7404200100001660002
456442
1-7,10-11
7401700100000080001
456900
75249503000
8-9,12-17
7401700100000080002
456901
7404300000100160001
457220
7443
75259890001
(17-91),(22-90)
7404300000100160002
457221
7404300000100180001
(5-51),(8-50)
7404300000100180002
7404300000100240001
(23-101),(22-100)
7404300000100240002
7404300000100320001
(9-51),(14-50)
7404300000100320002
7404300000100420001
(17-79),(14-80)
7404300000100420002
7404300000100450001
(15-51),(16-50)
7404300000100450002
(61-999),(52-999)
7500000100000250002
672000
7536
76401373000
(17-59),(36-50)
7500000100000250003
672010
7500000100000250004
76401368000
(1-53),(2-64)
7500000100000290001
(66-999),55
7500000100000290002
7500000100000300001
23,25,27-43
7500000100000300002
7500000100000300003
(91-141),(42-62),66
7500000100000400001
(1-89),(2-40)
7500000100000400002
672039
7500000100000490001
(15-27),28-999
7500000100000490002
672007
24,1-4,(23-31),6,8
7500000100000510001
43,45,(26-999)
7500000100000510002
7500000100000510003
(10-22),(5-21)
7500000100000510004
7500000100000580001
672020
7500000100000580002
672014
76401364000
(2-36),(1-61)
7500000100000630001
(38-62),63-999
7500000100000630002
672012
7500000100000760001
7500000100000760002
(91-999)
7500000100000760003
7500000100000760004
672027
19,(1-7),(41-999),(2-16),(26-32)
7500000100000870001
672006
(21-39),(34-48)
7500000100000870002
672040
(9-17),(18-24)
7500000100000870003
7500000100000870004
7500000100001250001
7500000100001250002
7500000100001250003
7500000100001250004
78-999
7500000100001650001
672038
(1-53),(57-67),(2-48)
7500000100001650002
55,(69-77),(54-76)
7500000100001650003
7500000100001690001
(53-73),75-999
7500000100001690002
(25-51),(44-74)
7500000100001690003
(2-42),(3-23)
7500000100001690004
84-999,(41-83)
7500000100001910001
(1-23),(2-46)
7500000100001910002
(25-39),(48-82)
7500000100001910003
7500000100002550001
(35-999),(48-998)
7500000100002550002
(60-998),(35-999)
7500000100002560001
(9-33),(6-58)
7500000100002560003
7500000100002560004
7500000100002600001
56-61
7500000100002600002
7500000100002600003
(62-999)
7500000100002600004
39-999,(32-38)
7500000100002720001
7500000100002720002
672023
(35-37),(22-30)
7500000100002720003
7500000100002720004
76401380000
(1-37),(40-44),2 
7500000100002850001
(45-63),64-999
7500000100002850002
(2-38),(46-62),(39-43)
7500000100002850003
(1-73),(2-54)
7500000100002960001
125-999
7500000100002960002
(75-123),(56-124)
7500000100002960003
7500000100002990001
57-999,(34-56)
7500000100002990002
7500000100002990003
7500000100003050001
34,36
7500000100003050002
7500000100003050003
7500000100003050004
7500000100003550001
672022
7500000100003550003
(43-77),(42-88)
7500000100003550004
(79-91),92-999
7500000100003550005
1,55
7500000100003650001
57-999
7500000100003650002
(3-29),(2-18)
7500000100003650003
(31-53),(20-56)
7500000100003650004
115-999,(48-114)
7500000100003690001
41,30,32
7500000100003690002
7500000100003690003
(43-113),(34-46)
7500000100003690004
7500000100003890001
(15-39),(8-14)
7500000100003890002
672019
(7-13),41-999,(16-40)
7500000100003890003
47-999,(30-46)
7500000100004010001
7500000100004010002
(2-28),(13-45)
7500000100004010003
2,(5-9),11-999
7500000100004220001
(1-3),(4-10)
7500000100004220002
7500000100004960001
76401000000
7500000100004960002
1,42,92
7500000100005010001
111-999,(94-110)
7500000100005010002
(3-53),(2-40)
7500000100005010003
(55-99),(44-90)
7500000100005010004
7500000100005220001
7500000100005220002
7500000100005220003
7500000100005220004
7500000100005360001
(23-29),30-999
7500000100005360002
(1-27),38
7500000100005600001
7500000100005600002
7500000100005600003
7500000100005600004
(3-13),14-999
7500000100005760002
7500000100005760003
17-999,(6-16),13
7500000100005770001
(1-11),(2-4),15
7500000100005770002
7500000100005860001
7500000100005860002
15,17,19-999
7500000100005950001
7500000100005950002
7500000100005950003
(1-35),(2-64)
7500000100005960001
(37-65),66-999
7500000100005960002
35-999,(10-34)
7500000100006030001
(1-33),(2-8)
7500000100006030002
7500000100007000001
7500000100007000002
(151-155),(90-106)
7600000100000140001
150062
7603
78401364000
(5-29),(2-72)
7600000100000140002
150007
(41-147)
7600000100000140003
150020
7600000100000140004
150055
7600000100000210001
150054
7606
78401380000
7600000100000210002
150043
(65-107)
7600000100000210003
150031
7600000100000430001
150023
7604
78401373000
(11-27),7
7600000100000430002
150046
7600000100000450001
150001
78401387000
13-95,(97-101),(120-140)
7600000100000450002
1,3,9,(13-19),(2-22)
7600000100000630001
(25-39),(26-40)
7600000100000630002
150047
3,5,11,(4-10),14,16
7600000100000680001
150014
78401368000
18,22,22 
7600000100000680002
25,27,26
7600000100001250001
150034
(3-23),(12-24)
7600000100001250002
150036
7600000100001330003
(65-107),(50-64)
7600000100001330004
150040
9,16
7600000100001850001
7600000100001850002
19,(2-26)
7600000100001910001
7600000100001910002
7600000100001910003
(15-31),34,34,36,38,49/7
7600000100002020001
150030
37,39,40,51,46,50,53/4,56
7600000100002020002
150048
(69-157),(76-156)
7600000100002020003
150035
7600000100002320001
25,27ª2,29,31,33,(22-36)
7600000100002320002
3,(13-29),2,(14-26)
7600000100002760001
(5-11),(4-12),82,24 
7600000100002760002
150025
7600000100003010001
150057
7600000100003010002
(21-27),(22-30)
7600000100003350001
150051
(6-18),(3-17)
7600000100003350002
1,3,7,(15-19),(2-22)
7600000100003680001
21/32,29/33,(33-37),(24-30)
7600000100003680002
7600000100003830001
7600000100003830002
(17-67),71,(16-56),14/2
7600000100003830003
18/50,(25-37)
7600000100003910001
(1-23),(2-16)
7600000100003910002
150003
(51-61),(48-54)
7600000100003910003
(20-46)
7600000100003910004
(1-13),41,2,6,8,28,30,6 
7600000100004110001
150049
42-67
7600000100004110002
7600000100004300001
7600000100004300002
7600000100004310001
18-61
7600000100004310002
7600000100004340001
150006
27-39
7600000100004340002
150010
(1-7),(2-38)
7600000100004410001
(9-107),(40-58),(62-82),60,60¡
7600000100004410002
7600000100004560001
80,83
7600000100004560002
150008
(11-19),(22-26),81
7600000100004560003
(137-159)
7600000100004920001
161-165
7600000100004920002
80 ,82,84 ,(88-150),89/2
7600000100004920003
(1-53),(57-87),55¡
7600000100004920004
(89-135)
7600000100004920005
(8-72),1¡
7600000100004920006
(74-76),66,64 ,64£
7600000100004920007
13,14
7600000100005010001
(3-11),15,(2-10)
7600000100005010002
(43-71),(54-86)
7600000100005140001
7600000100005140002
150000
7600000100005550001
(1-31),(8-30)
7600000100005550002
(32-48),(47-49)
7600000100005550003
7600000100005800001
(29-39)
7600000100005800002
7600000100006410001
7600000100006410002
150028
43-45,47-62
7600000100006410003
(1-5),(9-19)
7600000100006410004
(21-35),37
7600000100006410005
7600000100006410006
(5-9),(15-25),(39-59),63,69,2,1
7600000100006510001
26,26 ,27,27 
7600000100006510002
11-17,22-42,2
7600000100006670001
7600000100006670002
(3-7),11,11¡
7600000100007320001
17-35
7600000100007320002
7600000100007320003
7602
78401362000
(37-47),(38-74)
7600000100007320004
7600000100007320005
(79-93),97 
7600000100007320006
150044
(84-98)
7600000100007320007
7600000100007380001
(5-19)
7600000100007380002
7600000100007380003
27/7,35/10,41
7600000100007510001
29-31
7600000100007510002
(1-17),(33-41),(2-24),(34-46)
7600000100007510003
(38-42),36,39
7600000100007670001
7,9,11,30ª2,32,13,13ª2
7600000100007670002
21,(27-97),(44-86),108/1,114,118,112
7600000100007670003
(4-20),3,30
7600000100007670004
7600000100007770001
(35-87),(34-50)
7600000100007770002
32-34
7600000100007780001
(1-23),(4-28)
7600000100007780002
(1-17),8,14,18,22
7600000100007950001
(69-77),83,85,111,111/3,(84-92)
7600000100007950002
21,23,(57-61),(28-52),78
7600000100007950003
(27-47),25¡,(30-44)
7600000100008030001
(49-53)
7600000100008030002
(5-23),25,25¤,(2-28),1,3,3ª2
7600000100008030003
(77-101),(84-114)
7600000100008030004
(46-76)
7600000100008030005
7600000100008120001
(70-78)
7600000100008120002
7600000100008120003
55,(63-85),(52-62)
7600000100008120004
(21-35),(57-61),(14-42),50,45
7600000100008580001
7600000100008580002
63-81
7600000100008580004
1-140,142
7600000100008730001
141,144
7600000100008730002
3-71
7600000100008870001
73-169
7600000100008870002
(2-24),21
7600000100008940001
150022
(32-50),9
7600000100008940002
(13-37)
7600000100009010001
(39-177),(102-190)
7600000100009010002
7600000100009160001
(77-153),(76-152)
7600000100009160002
7600000100009730001
7600000100009730002
1 ,(19-47),(2-64),1¡,3
7600000100009730003
(9-15),17 
7600000100009730004
82
7600000100009730005
1áâà2,1áâà3,1áâà5,18-34,40-44
7600000100009910001
7600000100009910002
48-52,109,121,89 ,93
7600000100009910003
33,39¡,39¢,41 ,41áâà2
7600000100010230001
(1-15),(4-22)
7600000100010230002
7600000100010230003
(45-71)
7600000100010230004
(24-34)
7600000100010230005
7600000100010230006
7600000100010230007
41/2,43,51,53,50
7600000100010410001
7600000100010410002
1,2,2/2,8,24 
7600000100010580001
21,(39-83),95,24,(42-82)
7600000100010580002
1,3,5,3,5
7600000100010670001
7600000100010670002
1,2¡,3,35,37,(3-56)
7600000100010730001
(41-55),(60-78)
7600000100010730002
7600000100010730003
35-41,43-91
7600000100010840001
7600000100010840002
(5-33),(10-30)
7600000100010840003
29,(16-58)
7600000100010870001
7600000100010870002
(37-65),(60-82)
7600000100010870003
(5-9),(2-6),18,11/4,1
7600000100010870004
7600000100010930001
7600000100010930002
(4-26),5,7,25,25/6
7600000100010970001
(39-63),(28-72)
7600000100010970002
3,5,(21-31),(14-30)
7600000100011010001
(35-95),(32-102)
7600000100011010002
(3-7),(4-10)
7600000100011170001
7600000100011170002
7600000100011330001
7600000100011330002
7600000100011430001
9-70
7600000100011430002
1-3,(4-8)
7600600100000350001
152072
7611
7617
78215501000
1,(5-9),12-114
7600600100000350002
152070
1-3,(6-8),34-54
7600600100000410001
(5-9),10-32
7600600100000410002
7600600100000440001
14-96
7600600100000440002
7600600100000640001
18-26
7600600100000640002
1-45,57-84
7600600100000710001
48-56
7600600100000710002
7600600100000850001
47-124
7600600100000850002
86,54,91
7601200021300030001
152004
7608
7622
78232855001
22,41
7601200028000010001
78232855016
7601200031100010001
78232855019
7601400100000220001
152151
7609
78410000000
19-102
7601400100000220002
152150
7601400100000230001
1-63,65-999
7601400100000230002
7601400100000430001
7601400100000430002
7601400100000690001
7601400100000690002
18-28,88
7601400100000720001
61-64,73-74,86
7601400100000720002
152155
1,3-6,9-16,29-52,57,59
7601400100000720003
43-50
7601400100000820001
7601400100000820002
7601400100000920001
41-80
7601400100000920002
(87-91),(105-115),(122-130),142
7601400100001050001
(144-148),(154-158),162
7601400100001050002
7601400100001050003
23-86,(88-116),120
7601400100001050004
40-47,52,54
7601400100001190001
3-10,13-19,22-27,32,34-37
7601400100001190002
7601400100001190003
1-15,(17-37)
7601500100000080001
152907
7610
78415000000
16,18,20,22,24,26,30
7601500100000080002
152925
7601500100000160001
152903
(1-11),4
7601500100000280001
152920
12,(13-25)
7601500100000280002
(39-79)
7601500100000280003
7601500100000380001
152919
(29-31)
7601500100000380002
152918
30,32-40,45
7601500100000380003
52-60
7601500100000380004
152915
7601500100000730001
152901
8-47
7601500100000730002
152934
7601500100001140001
151-169
7601500100001140002
171-201
7601500100001140003
1-37,39,41-43
7601500100001180001
38,40,44-85
7601500100001180002
7601500100001220001
1,5-54
7601500100001220002
152930
4-39
7601500100001250001
48-74
7601500100001250002
1-65,67-75,77-87
7601500100001380001
66,76
7601500100001380002
93-97
7601500100001380003
152931
7601500100001490001
17-59
7601500100001490002
1-10,52-56,58,60,62
7601500100001550001
152900
51,53,59,61,64-90
7601500100001550002
1-33,52-60,70,78
7601500100002260001
41-51,88,90,106
7601500100002260002
4,4 ,6,6 ,16
7601500100002390001
(11-17),18,30,30/64,32-36
7601500100002390002
(1-63),(2-84)
7601500100002840001
(65-101),(86-102)
7601500100002840002
103-141
7601500100002840003
7601500100002950001
1-56,58-66
7601500100002950002
2 
7601500100002990001
1,2,3-19
7601500100002990002
146-148,159-167
7601500100003040001
150-154,169,171,173,175
7601500100003040002
152912
156,158,160,162,164,166,168,170,172,174
7601500100003040003
176-193
7601500100003040004
1-5,7-11
7601500100003120001
6,6 ,8
7601500100003120002
7601500100003190001
11-50
7601500100003190002
1-55,65
7601500100003350001
56-64,67-103
7601500100003350002
152935
7601500100003570001
27-32
7601500100003570002
7601500100003700001
7-174
7601500100003700002
7601500100004320001
10,12,26
7601500100004320002
15,16,17-25,27-40
7601500100004320003
1-33,35
7601500100004560001
34,36-41
7601500100004560002
3,5,7,9,11,13,15,17,19,21,23,25,27,29
7601500100004610001
2,4,6,8,10,12,14,16,18,20,22,24,26,28
7601500100004610002
30-56
7601500100004610003
7601500100004910001
83-105
7601500100004910002
7601500100004940001
6-16
7601500100004940002
7601500100004980001
152905
48-58
7601500100004980002
7601500100005200001
19-33
7601500100005200002
1-82
7601500100005250001
152906
85-135
7601500100005250002
152926
1-20,36
7601500100005290001
22,28-34
7601500100005290002
1,3,5,7,9,11,12
7601500100005330001
(2-10),17,19-26,28-44
7601500100005330002
7601500100005440001
31-56
7601500100005440002
7601500100006170001
41-50
7601500100006170002
7601500100006270001
7-21
7601500100006270002
7601500100006550001
29,31-68,70,72,74
7601500100006550002
69,71,73,75-96
7601500100006550003
1-9,11,13,15,17,19,21,23,25,27,29
7601700100000060001
152615
7612
78420000000
10,12,14,16,18,20,22,24,26,28,30,32,34
7601700100000060002
152612
33,35,37,39,41,43,45,49,51,53,55,59
7601700100000060003
36,38,40,42
7601700100000060004
61,63,65,67,69,71,73,75,77,79
7601700100000060005
7601700100000220001
152610
13-37
7601700100000220002
1-26,28,30
7601700100000330001
27,29,31-60
7601700100000330002
1,3,5,7,9,11,13,15,8 ,12 ,14 ,16 ,¡
7601700100000380001
2,4,6,8,10,12,14,18,19, ,20-59
7601700100000380002
1-41,43,45,47,49,51
7601700100000430001
42,44,46,48,50,52-81
7601700100000430002
1,3,5,7,9,11,13,15,17,19,21,23,25,27,29
7601700100000490001
102,104,106,108,110,112,114,116,118,120
7601700100000490002
105,107,109,111,113,115,117,119,121,123
7601700100000490003
122,124,126,128,130,132,134,136,138,140
7601700100000490004
125,127,129,131,133,135,137,139,141,143
7601700100000490005
142,144,146,148,150,152-207
7601700100000490006
145,147,149,151
7601700100000490007
16,18,20,22,24,26,28,30,32,34,36,38,40
7601700100000490008
2,4,6,8,10,12,14
7601700100000490009
31,33,35,37,39,41,43,45,47,49,51,53,55
7601700100000490010
42,44,46,48,50,52,54,56,58,60,62,64,66
7601700100000490011
57,59,61,63,65,67,69,71,73,75,77,79
7601700100000490012
68,70,72,74,89,91,93,95,97,99,101,103
7601700100000490013
76,78,80,82,84,86,88,90,92,94,96,98,100
7601700100000490014
81,83,85,87, 
7601700100000490015
1-42,44,46,48,50
7601700100000680001
43,45,47,49,51-104
7601700100000680002
1-9,11,13
7601700100000700001
10,12,14,15, ,16-66
7601700100000700002
1,3,5,7,9,11,13,30-38
7601700100000710001
7601700100000710002
1-44,45, ,46,48,52,54,56
7601700100000750001
47,49,51,53,55,57-80
7601700100000750002
1,3,5,7,10
7601700100000790001
152613
12,14,16,17,18
7601700100000790002
1-62,64,66,68,70
7601700100000820001
63,65,67,69,71-124
7601700100000820002
7601700100000980001
20, ,21-35,36,38,40,42,44
7601700100000980002
7601700100001010001
30,58,60,62
7601700100001010002
7601700100001010003
32,34,36,38,40,42,44,46,48,50,52,54,56
7601700100001010004
4,6,8,10,12,14,16,18,20,22,24,26,28
7601700100001010005
57,59,61,63-93
7601700100001010006
7601700100001130001
19,21-39
7601700100001130002
1-41,43,45,47,49
7601700100001160001
42, ,44,46,48,50-73
7601700100001160002
7601700100001190001
21,23-77
7601700100001190002
1-38,40,42,44,48,50,52,54,56,58
7601700100001200001
39,41,43,45,47,49,51,53,55,59-110
7601700100001200002
7601700100001230001
51-57
7601700100001230002
8900000400000010001
629603
8906
71175000000
(16-22),(28-34)
8900000400000010002
629604
1-11,(25-49),(13-17),(18-22)
8900000400000020001
629602
(36-38),(44-46),26,32
8900000400000020002
8900000400000040001
629601
(4-22),(26-34),(38-40),(48-54)
8900000400000040002
(56-70),(74-80),(84-98)
8900000400000040003
(112-132)
8900000400000040004
1-9,11-26
8900000400000050001
(8-26),(30-40)
8900000400000060001
8900000400000060002
8900000400000060003
8900000400000060004
424
8900000400000060005
53,59
8900000400000060006
(67-77),(52-56),(60-72)
8900000400000060007
(74-76),(79-83),(93-95)
8900000400000060008
(103-117),(123-131)
8900000400000060009
86,(94-96)
8900000400000060010
(3-5),(13-17),(25-29)
8900000400000070001
8900000400000070002
(6-38)
8900000400000070003
1,3-13,15
8900000400000080001
(21-25),(29-37),(39-41),38,50
8900000400000080002
8900000400000090001
(5-9),(13-15)
8900000400000090002
10-11
8900000400000090003
16-25
8900000400000090004
8900000400000090005
8900000400000100001
(9-31)
8900000400000100002
8900000400000100003
8900000400000100004
(61-67),89
8900000400000100005
(6-26)
8900000400000110001
8900000400000120001
8900000400000120002
8900000400000130001
8900000400000130002
(9-25),29
8900000400000130003
(5-7),(11-13)
8900000400000140001
(6-12),(18-28),(42-44)
8900000400000140002
(15-17),(21-25),(31-45),(55-63)
8900000400000140003
(38-44),(48-52)
8900000400000150001
(3-17),(21-27),(10-32)
8900000400000180001
2-24
8900000400000190001
8900000400000200001
(7-11),(27-29)
8900000400000200002
8900000400000200003
8900000400000200004
3-11,(13-15)
8900000700000020001
629806
8905
71178000000
8900000700000020002
629804
8900000700000020003
629802
1-6,(7-11)
8900000700000150001
46,48,50
8900000700000150002
629803
(8-12),13-45
8900000700000150003
629810
1-21,31,33
8900000700000220001
8900000700000220002
71/107,(28-78)
8900000700000220003
629807
(84-88),94,96
8900000700000220004
629805
109,111,113
8900000700000250001
115,117
8900000700000250002
6
8900000700000250003
629809
(35-103)
8900000700000250004
1-15,(22-62)
8900000700000430001
8900000700000430002
(14-28),42
8900000700000450001
8900000700000450002
53/4,4-15,17,19,39,41,45,49,53,55
8900000700000470001
86/61,1,(63-69),(81-85),90
8900000700000470002
90,94,96,98,107
8900000700000470003
(20-58),(70-82)
8900000700000470004
8900000700000530001
61/21,82/2,1-19,(25-29),(35-39),66
8900000700000530002
76,78,81/82
8900000700000530003
(4-46),60
8900000700000560001
(5-9),41,(47-51)
8900000700000560002
8900000700000790001
88/34,(78-86),(83-105)
8900000700000790002
(31-47)
8900000700000790003
(55-79)
8900000700000790004
8900000700000790005
120,120,125,126,132,141
8900000700001100001
8900000700001100002
629801
(2-200),(1-235)
1801100100000540001
(202-242),(237-277)
1801100100000540002
5,6,8,9,11-16,18
5002400011200010001
142600
46243828004
1-29,31-999
6900000200001420001
30,
6900000200001420002
2,3,6,8,10,12
6900000200001460001
1,4,5,7,9,11,13-999
6900000200001460002
(1-41),42-67
5000002800002910001
(6-18),32
5000002800002910002
2-100
7600000100011900001
7600000100011900002
5002400001100000001
142649
46243846002
5002400003500000001
46243813003
5002400007000000001
46243813006
5002400007200000001
142664
46243813000
5002400008400000001
46243813005
5002400008500000001
142653
46243846005
5002400008900000001
142631
46243837001
5002400009800000001
46243846007
5002400010100000001
46243846003
5002400011300000001
142611
46243828007
5002400011200000001
5002400013400000001
142660
46243810007
5002400013900000001
142643
46243843002
5002400014100000001
46243846000
5002400016200000001
46243846004
5002400018700000001
46243846008
5002400005200000001
46243828000
5002400004700000001
142632
46243822000
5002400003400000001
142601
46243828003
6300000100010120001
(5-17),(2-4)
6300000100010120002
3600000100012170001
3600000100012170002
5500000100700000001
644049
5500000108500000001
644903
(1-101),(2-14)
2202900000100500001
658960
2235
2258
01227816001
(63-109),(2-86)
2202900000100630001
(2-90),(1-75)
2204800000100310001
658033
2208
2277
01247551000
2204800000100520001
658032
(40-84),(47-85)
2204800000100810001
658031
(16-50),(19-99)
2204800000101940001
1,5,7
5000002800002920001
5500000100500000001
644114
4602000010100010001
307371
38234888001
4602000010100020001
4602000010100030001
4602000010100040001
4602000010100050001
4602800100000860001
0200000500001050001
(11-89),(6-84)
3400000100028210001
3403300002700010001
404486
3433
18258832001
3403300002700020001
3403300002700030001
3403300002700040001
3403300002700050001
3403300002700070001
3403300002700090001
3403300002700100001
3403300002700110001
3403300002700120001
3403300002700130001
3403300002700140001
3403300002700150001
3403300001500010001
404472
18258818001
3403300001500020001
3403300001500030001
3403300001500040001
3403300001500050001
3403300001500060001
3403300001500070001
3403300001500080001
3403300001500090001
3403300000300010001
404478
18258804001
3403300000300020001
3403300000300030001
3403300000300040001
3403300000300050001
3403300000300060001
3403300000300070001
3403300000300080001
3403300000300090001
3403300000900010001
404482
18258816001
3403300000900020001
3403300000900030001
3403300000900040001
3403300000900050001
3403300000900060001
3403300000900070001
3403300000900080001
3403300000900090001
3403300000900100001
3403300000900110001
3403300000900120001
3403300002700170001
3403300000800010001
404470
18258812001
3403300000800020001
3403300000800030001
3403300000800040001
3403300000800050001
3403300000800060001
3403300000800070001
3403300002400010001
18258812003
3403300002400020001
3403300002400030001
3403300002400040001
3403300001900010001
404471
18258828001
3403300001900020001
3403300001900030001
3403300001900040001
3403300001900050001
3403300001900060001
3403300001900080001
3403300001900090001
3403300001900100001
3403300001900110001
3403300001900120001
3403300001900130001
3403000002600160001
404450
18253836001
71-73
3401500100001610001
(93-143),(84-132)
6600000100001070001
620075
6672
65401380000
(1-91),(2-82)
6600000100001070002
6670
65401373000
(95-141),(106-156)
6600000100001330003
620142
6671
65401377000
(1-43),(2-50)
6600000100001600001
620100
(32-56)
6600000100002410002
6600000100004600001
6600000100004600002
6600000100004600003
620000
65401000000
6600000100004610001
620026
6600000100004610002
(81-999),(80-998)
6600000100005060001
620078
(40-58)
6600000100006050001
(67-117),(74-132)
6600000100006330002
6600000100006330003
620027
6659
65401368000
(47-93),(74-120)
6600000100006480001
6600000100006480003
620014
6658
65401364000
(73-139),(52-72)
6600000100006490002
(23-71),(2-42)
6600000100006490003
6600000100006660002
(1-53),(2-70)
6600000100006860002
(1-45),(2-36)
6600000100007170002
620144
6600000100013490001
620082
(71-999),(56-998)
6600000100011050002
(53-999),(36-998)
6600000100012260001
6600000100012260002
6600000100012290001
6600000100012290002
6600000100012370001
6600000100012370002
6674
65401390000
6600000100012950001
6600000100012990002
6600000100002850001
6600000100011260001
6600000100011260002
6600000100008950001
6600000100008950002
6600000100007770001
6600000100007770002
6600000100012730002
(1-49),(2-34)
6600000100009090002
(1-49),(2-998)
6600000100010010001
(51-999)
6600000100010010002
6600000100010800001
(53-999),(52-998)
6600000100010800002
(1-7),(2-52)
6600000100012360001
6600000100013200001
620102
(185-999),(180-998)
6600000100002280001
(1-181),(2-178)
6600000100002280002
620146
(1-79),(2-84)
6600000100008110001
620141
(81-999),(86-998)
6600000100008110002
(29-999),(28-998)
6600000100008530001
6600000100008530002
(1-57),(2-30)
6600000100012320001
(93-999),(84-998)
6600000100012680001
(1-27),2
6600000100000340002
(1-45),(2-28)
6600000100012310001
(1-81),(2-134)
6600000100001310001
620034
(115-173),(136-186)
6600000100001310002
6600000100001840002
6600000100000180001
12 ,(14-998)
6600000100002860002
620107
(43-999),(32-998)
6600000100009980002
620149
(1-999),(2-48)
6600000100004950001
6600000100004950002
6600000100010440001
6600000100010440002
6600000100009680001
(1-33),(2-18)
6600000100012750001
(5-59)
6600000100002030002
6600000100000850001
6600000100000850002
6600000100003970001
(23-999),(28-998)
6600000100003970002
(1-79),(2-80)
6600000100010680001
(1-47),(2-66)
6600000100011630001
(55-999),(68-998)
6600000100011630002
6600000100006060001
(35-103),(60-72)
6600000100006060002
6600000100006060003
6600000100006060004
6600000100008520001
6600000100008520002
(33-999),(28-998)
6600000100000490001
(1-31),(16-26)
6600000100000490002
3-11
4402400100001980001
5000002200000150001
141091
5054
46493000000
5000002200000150002
141092
5000002200000150003
141090
5000002200000250001
5000002200000250002
5000002200000260001
5000002200000260002
97
7201100003300170001
71226872001
5200000100013700001
5200000100013700002
1-117,119-999
5200000100002900001
118
5200000100002900002
5900000100014860001
5900000100014860002
5900000100014860003
5900000100014860004
(10-68),(47-55)
6300000700006790001
(70-100),(91-97)
6300000700006790002
6300000700006940001
25,30
6300000700006940002
6300000100010270001
(4-6),3
6300000100010800001
6300000100010800002
(2-140),(1-117)
6300300000100190001
446250
6362
36204551000
142
6300300000100190002
446253
(2-46),(1-55)
6300300000100250001
(48-56),(57-69)
6300300000100250002
446252
(2-52),(1-73)
6300300000100290001
(54-60),(75-79)
6300300000100290002
(2-44),(1-47)
6300300000100360001
6300300000100360002
(2-62),(1-81)
6300300000100460001
(83-85)
6300300000100460002
(2-152),(1-93)
6300300000100520001
(162-170),(95-107)
6300300000100520002
(2-104),(1-91)
6300300000100630001
(106-110),(93-107)
6300300000100630002
4,(1-13)
6300300000100640001
(2-10),(15-27)
6300300000100640002
108,(71-105)
6300001000000020001
446430
6350
36408000000
6300001000000020002
446435
(26-106),(25-67)
6300001000000020003
446436
(2-120),(1-33)
6300001000000280001
(35-97)
6300001000000280002
(2-56),(1-55)
6300001000000320001
(58-100),(57-97)
6300001000000320002
(58-120)
6300001000000470001
6300001000000470002
(64-80),(57-73)
6300001000000550001
(4-62),(1-55)
6300001000000550002
6300001000000800001
446431
(20-38),(1-31)
6300001000000800002
446433
(2-38),50,(1-59)
6300001000000900001
(64-96),65,(67-87)
6300001000000900002
(2-30),(1-31),(39-91)
6300001000000920001
(36-38),43,(33-37)
6300001000000920002
(2-14),(3-13),27
6300001000001020001
(16-20),(17-19)
6300001000001020002
(2-42),(1-57)
6300001000001060001
(60-72),82,63,69,71
6300001000001060002
(2-6),(1-57)
6300001000001090001
(8-68),(59-65)
6300001000001090002
(70-126),(67-125)
6300001000001090003
(2-64),(1-53)
6300001000001160001
(66-72),(55-73)
6300001000001160002
(74-82),(75-83)
6300001000001160003
(2-24),(1-29)
6300001000001190001
(26-68),(31-75)
6300001000001190002
(120-124),(77-117)
6300001000001190003
6300001000001230001
(14-40),(15-37)
6300001000001230002
6300001000001290001
(32-52),(13-25)
6300001000001290002
(30-76),(27-65)
6300001000001360001
6300001000001360002
(78-100),(67-115)
6300001000001360003
(2-52),(1-65)
6300001000001780001
(54-84),(67-79)
6300001000001780002
(30-34),44,(35-37)
6300001000001940001
(36-42),48,(60-70),(1-29),(39-75)
6300001000001940002
(2-68),(1-49),(53-67)
6300000400000030001
445244
6325
36418000000
6300000400000030002
445240
(2-50),(1-55)
6300000400000590001
(52-178),(57-195)
6300000400000590002
445245
2,(3-19)
6300000400000630001
(4-16),(21-29)
6300000400000630002
6300000400000810001
(2-76),(47-373)
6300000400000810002
6300000400001160001
(42-54),(45-97)
6300000400001160002
445243
(6-30),(1-105)
6300000400001730001
(32-128),(107-247)
6300000400001730002
(2-6),(1-27)
6300000400001950001
(8-100),(29-267)
6300000400001950002
6300000500000030001
446301
6372
36424000000
6300000500000030002
446304
(47-77)
6300000500000040001
446302
6300000500000040002
446303
(40-74),(27-55)
6300000500000050001
6300000500000050002
6300000500000110001
6300000500000110002
(2-18),(3-5)
6300000500000150001
446300
6300000500000150002
(2-48),(1-41),41 
6300000500000160001
(50-70),58 ,(43-111)
6300000500000160002
446305
(39-59)
6300000500000190001
(61-73)
6300000500000190002
(62-84),106,108
6300000500000190003
(2-60),(3-37)
6300000500000190004
(82-88)
6300000500000320001
(2-54),(1-45)
6300000500000320002
(56-80),(55-65)
6300000500000320003
(4-12),(3-9)
6300000500000360001
(18-40)
6300000500000360002
446306
(2-20),(3-23)
6300000500000380001
(22-30),(25-35)
6300000500000380002
36¡,38 ,(40-42),39/2,(43-51)
6300000500000410001
(28-38),(33-41)
6300000500000410002
(2-26),(1-31)
6300000500000410003
6300000500000410004
6300000500000420001
6300000500000420002
(28-36),(31-33)
6300000500000420003
(46-60),(1-21)
6300000500000430001
(62-72),(23-27)
6300000500000430002
(74-80)
6300000500000430003
6300000500000430004
(8-32),(23-29)
6300000500000600001
6300000500000600002
(64-78),(89-95)
6300000500000610001
(2-42),(1-59)
6300000500000610002
(44-62),(61-87)
6300000500000610003
(80-106),(97-105)
6300000500000610004
(2-50),(1-33)
6300000500000630001
(56-64)
6300000500000630002
6300000500000690001
(14-30),(1-45)
6300000500000690002
6300000900000080001
446454
36427000000
(26-50),(3-47)
6300000900000080002
446452
6300000900000170001
(10-24),(9-25)
6300000900000170002
446453
6300000900000470001
(32-78),(31-53)
6300000900000470002
(12-42),(1-9)
6300000900000480001
(13-51)
6300000900000480002
6300000900000500001
(14-66),(15-75)
6300000900000500002
(2-18),(1-19)
6300000900000510001
(24-40),(21-59)
6300000900000510002
446450
6300000900000550001
(40-114),(1-29)
6300000900000550002
(118-188),(31-61)
6300000900000550003
6300000900000570001
(30-90),(23-91)
6300000900000570002
(2-30),1,1 
6300000900000700001
(34-60),(5-33)
6300000900000700002
6300000900000740001
(22-72),(23-73)
6300000900000740002
6300000900000790001
(28-52),(31-55)
6300000900000790002
6300000900000840001
(32-98),(31-107)
6300000900000840002
6300000900000890001
(16-72),(15-61)
6300000900000890002
(2-36),(1-25)
6300000900000950001
(38-94),(27-83)
6300000900000950002
(2-42),(1-29)
6300000900001000001
(44-110),(33-111)
6300000900001000002
6300000900001060001
(42-72),(51-93)
6300000900001060002
6300000900001080001
(2-54),(133-251)
6300000900001080002
6300000900001090001
30 ,(32-86),(31-89)
6300000900001090002
6300000900001140001
(34-70),(37-65)
6300000900001140002
(2-32),(1-27)
6300000900001220001
6300000900001220002
6300000900001290001
(26-68),(25-69)
6300000900001290002
(34-62),(23-43)
6300000900001390001
6300000900001390002
(2-16),(7-9)
6300000900001410001
(18-62),(1-5),(11-65)
6300000900001410002
6300000900001450001
(42-98),(37-93)
6300000900001450002
6302100000100150001
446540
6381
36238832001
(22-60),(21-61)
6302100000100150002
446541
6302100000100160001
(32-64),(33-63)
6302100000100160002
(2-64),(1-27)
6302100000100200001
(66-130),(29-129)
6302100000100200002
(2-34),(1-33)
6302100000100260001
(36-44),(35-43)
6302100000100260002
(2-78),(1-73)
6302100000100280001
(80-114),(75-91)
6302100000100280002
(2-30),(21-31)
6302100000100330001
6302100000100330002
(2-6),(1-9)
6302100000100340001
6302100000100340002
(2-32),(1-31)
6302100000100390001
(34-52),(33-55)
6302100000100390002
6300000600000030001
446103
36450000000
(18-78),(23-79)
6300000600000030002
446114
(4-10),1-5
6300000600000080001
446115
(16-26),(5-15)
6300000600000080002
6300000600000100001
446116
(112-208)
6300000600000100002
446100
(222-294),(9-57)
6300000600000100003
6300000600000210001
(20-32),(19-31)
6300000600000210002
(2-96),(1-93),101
6300000600000230001
(98-132),(95-99),(103-131)
6300000600000230002
6300000600000250001
(10-32),(9-31)
6300000600000250002
6300000600000260001
(24-48),(27-41)
6300000600000260002
6300000600000350001
(24-82),(19-81)
6300000600000350002
(6-12),(1-21)
6300000600000380001
446110
6300000600000380002
(64-150),(73-113),65
6300000600000380003
(2-8),(1-27)
6300000600000440001
(14-36),(29-41)
6300000600000440002
6300000600000590001
(12-14),(1-15)
6300000600000590002
(2-16),(1-7)
6300000600000610001
(18-72),(9-73)
6300000600000610002
(2-16),(1-27)
6300000600000780001
(26-64),(31-53)
6300000600000780002
(66-92),(63-109)
6300000600000780003
(98-146),(117-165)
6300000600000780004
6300000600000800001
(18-68),(23-77)
6300000600000800002
6300000600000960001
(20-76),(21-91)
6300000600000960002
(8-28),3
6300000600000970001
(30-100),(15-33)
6300000600000970002
446113
(6-14),(1-5)
6300000600001110001
6300000600001110002
(2-22),(1-43)
6300000600001150001
6300000600001150002
(2-92),(1-105)
6300000600001180001
(94-102),107
6300000600001180002
2,1
6300000600001330001
6300000600001330002
(2-48),66,(3-19)
6300000600001400001
54,56,90,95,101,103
6300000600001400002
(68-140),(21-83)
6300000600001400003
(2-88),(1-91)
6300000600001470001
(100-144),(99-127)
6300000600001470002
(2-116),(5-121),131,133
6300000600001510001
118,120,123,125,145
6300000600001510002
(2-60),(1-61)
6300000600001600001
446101
35,70,72,63
6300000600001600002
446112
(2-190),(1-205)
6300000600001660001
(192-270),(207-261)
6300000600001660002
(2-176),(1-205)
6300000600001670001
6300000600001670002
(2-74),(5-75)
6300000600001780001
(76-96),(81-99)
6300000600001780002
6300000600001810001
6300000600001810002
6300000600001840001
(14-18),(13-19)
6300000600001840002
(4-10),(3-11)
6300000600001870001
(22-118),(15-109)
6300000600001870002
6300000600001880001
(22-24),(15-21)
6300000600001880002
6300000600001930001
(12-46),(13-55)
6300000600001930002
(48-126),(57-117)
6300000600001930003
(2-40),(1-15)
6300000600001970001
(42-82),(17-59)
6300000600001970002
6300000800000010001
446020
36435000000
(30-86),(31-87)
6300000800000010002
446031
(16-26),11
6300000800000010003
446028
36,(19-39)
6300000800000160001
446009
(2-34),(1-15)
6300000800000160002
446029
(2-100),(19-87)
6300000800000580001
446013
(102-150),(89-127)
6300000800000580002
446005
(2-24),(13-29)
6300000800000730001
446001
6300000800000730002
446026
(8-68),(33-85)
6300000800000740001
6300000800000740002
6300000800000840001
6300000800000840002
6300000800000840003
(2-36),(1-47)
6300000800001140001
(40-444),(67-193)
6300000800001140002
446023
(2-74),(1-79)
6300000800001170001
(76-98)
6300000800001170002
6300000800001330001
(16-36),(17-29)
6300000800001330002
(38-74)
6300000800001330003
446011
6300000800001440001
6300000800001440002
(2-80),(5-81)
6300000800001700001
(82-178),(83-151)
6300000800001700002
(14-32),(1-33)
6300000800001750001
(2-12),(35-81)
6300000800001750002
(47-101)
6300000800001970001
(2-76),(1-45)
6300000800001970002
6300000800002150001
(46-92),(49-91)
6300000800002150002
6300000800002230001
6300000800002230002
(120-202),(101-183)
6300000800002320001
(22-118),(13-99)
6300000800002320002
(36-74),(1-25)
6300000800002360001
(4-34)
6300000800002360002
6300000800002540001
6300000800002540002
(16-36),(13-37)
6300000800002590001
6300000800002590002
(64-102)
6300000800003040001
(2-62),(1-39)
6300000800003040002
446014
6300000800003440001
(8-34),(3-17)
6300000800003440002
6300000800003510001
446012
(16-88),(17-115)
6300000800003510002
(90-112)
6300000800003510003
6300000800003640001
6300000800003640002
(6-80),(39-109)
6300000800003700001
2,(1-35)
6300000800003700002
(2-18),(3-25)
6300000800003710001
(22-28),(29-101)
6300000800003710002
6300000800003720001
(11-25)
6300000800003720002
(84-116),(71-105)
6300000800003960001
(4-82),(1-67)
6300000800003960002
(85-109),66
6300000800003970001
(2-64),(1-83)
6300000800003970002
(2-52),(1-39)
6300000800004300001
446008
(54-74),(41-71)
6300000800004300002
(16-70),(27-147)
6300000800004330001
(2-14),(1-25),27 
6300000800004330002
(36-84),29 ,(31-75)
6300000800004450001
6300000800004450002
(2-48),(3-49)
6300000800004660001
(50-108),(51-99)
6300000800004660002
(86-142),(57-107)
6300000800005230001
(4-84),(3-55)
6300000800005230002
(20-82),(1-13),(81-91)
6300000800005300001
446010
(15-79),(93-101)
6300000800005300002
6300000800005310001
(4-46),(1-43)
6300000800005310002
(2-190),(1-145)
6300000800005460001
(149-207)
6300000800005460002
(104-190),(111-191)
6300000800005540001
(6-102),(1-107)
6300000800005540002
6300000800005580001
(42-129)
6300000800005580002
6300000800005900001
6300000800005900002
6300000100011650001
6300000100011650002
6300000100011790001
443112
7-15
6300000100011790002
443026
6300000100012120001
25
6300000100012120002
(9-23),(28-34)
6300000100012380001
6300000100012380002
(2-6),(1-35)
6300000100012440001
(8-60)
6300000100012440002
6300000100012450001
8-25
6300000100012450002
20,21,48,50,52
5000000400001240001
4,6,7,8,17,3
5000000400001240002
73,75,77,79,81,87,89,91,93
5000000000200010001
142810
5045
46572000000
5000200100401270001
5000200100401270002
5000200100100660001
5000200100100660002
5000200100100660003
28-34
5000200100100660004
5300000100000160001
173007
5321
49401000000
5300000100000160002
173015
1-44,(46-68)
5300000100000230001
173000
(45-65),67,69-116
5300000100000230002
173020
1-80,82
5300000100000240001
173003
81,83-181
5300000100000240002
173008
24-35
5300000100000490001
5300000100000490002
5300000100000530001
1-3,5-21
5300000100000530002
173016
(34-58)
5300000100000530003
173018
25-33,(35-57)
5300000100000530004
173023
5300000100000780001
5300000100000780002
15-21,(23-31),37-54
5300000100000780003
173025
5300000100001020001
11-17
5300000100001020002
5300000100001050001
12-47
5300000100001050002
5300000100001200001
5300000100001200002
5300000100001340001
13,15-44
5300000100001340002
1-18,37-45,47,51
5300000100001450001
22-34,46,48,52-124
5300000100001450002
1-32,(34-42)
5300000100001530001
5300000100001530002
1-13,16
5300000100001570001
14,19-26
5300000100001570002
5300000100001600001
37-71
5300000100001600002
2,3ª3
5300000100001780001
3ª2,4-22
5300000100001780002
3-18
5300000100001800001
5300000100001800002
3-15
5300000100001840001
19-36
5300000100001840002
1/11,21-35
5300000100001930001
5300000100001930002
5300000100002060001
5300000100002060002
(3-33),40-42
5300000100002580001
(6-38),42/2
5300000100002580002
3-14,16
5300000100002600001
15,18-60
5300000100002600002
5300300100000020001
174411
5331
5320
49408000000
67-106
5300300100000020002
174416
1-66,(68-98)
5300300100000080001
(67-97),99-140
5300300100000080002
87-91,(93-107),134-160
5300300100000180001
174403
3-70
5300300100000180002
174406
73,77,122
5300300100000180003
77,79-84,(92-120),130
5300300100000180004
5300300100000210001
174401
(2-4),6-10
5300300100000210002
1-36,(38-54)
5300300100000250001
174404
(37-53),55-86
5300300100000250002
174408
22-23
5300300100000330001
1-20,32-41
5300300100000330002
103,105-113,115-170
5300300100000410001
5300300100000410002
62-102,104,114
5300300100000410003
3-57
5300300100000510001
5300300100000510002
1-71,77,91
5300300100000520001
76,78-90,92-145
5300300100000520002
5300300100000620001
38-75
5300300100000620002
174409
5300300100000660001
50-127
5300300100000660002
5300300100000770001
22-61
5300300100000770002
2,4-31,37
5300300100000780001
1,3,36,38-41
5300300100000780002
1-42,(44-62)
5300300100000800001
(43-61),63-128
5300300100000800002
5300300100000910001
5300300100000910002
93,97,123-127,129,131-140
5300300100000970001
101,128,130
5300300100000970002
2-34,36
5300300100000970003
35,37-92,94-96,98-100,102-116
5300300100000970004
5300300100001060001
35-44
5300300100001060002
1-16,(18-24)
5300300100001130001
(17-23),25-42
5300300100001130002
(107-111),113-154
5300300100001240001
3-41
5300300100001240002
47-106,(108-112)
5300300100001240003
1-37,(39-51)
5300300100001370001
(38-50),52-145
5300300100001370002
5300300100001520001
174407
2-6,(10-12)
5300300100001520002
3-58
5300300100001650001
62-103
5300300100001650002
69,73,83-110
5300300100001780001
1-26,(38-40)
5300300100001780002
29-35,39,43-66,70,74
5300300100001780003
10-23,28
5300300100001990001
25,29-64
5300300100001990002
74-88
5300300100001990003
(46-68),70-115
5300300100002010001
1-45,(47-69)
5300300100002010002
(152-166)
5300300100002020001
1-90,(92-98)
5300300100002020002
(91-97),99-151,(153-185)
5300300100002020003
38-89
5300300100002030001
5300300100002030002
5300300100002170001
3-27
5300300100002170002
102,104,106-149
5300300100002190001
10-36
5300300100002190002
51-101,103,105
5300300100002190003
1-90
5300300100002230001
91-134
5300300100002230002
5300300100002420001
62-101
5300300100002420002
5300400100000150001
175400
5302
49208501000
34-55
5300400100000150002
175403
5300400100000430001
32-55
5300400100000430002
175402
4,8-14
5300400100000520001
5300400100000520002
175405
5300700000100110001
175460
5305
49214551000
38,41-71
5300700000100110002
175461
5300700000100170001
(2-34),38-86
5300700000100170002
55,88,(90-96)
5300700000100320001
1-54,56-84
5300700000100320002
5300700000100340001
5300700000100340002
22-58
5300700000100450001
5300700000100450002
5300700000100720001
17-60
5300700000100720002
(19-23),25-162
5302000100000140001
174210
5336
5318
49250501000
1-18,(20-24)
5302000100000140002
174213
72-100
5300000100002960001
5300000100002960002
2,4-68
5301200100000880001
174351
5311
49228501000
5301200100000880002
174352
1-8,10-12
5300900100000520001
174260
5307
49220501000
9,13-45
5300900100000520002
174262
3700100012900250001
3700100200001740001
153510
3700100200001740002
(103-131),(90-130)
2202900000100890001
658961
2200000700100010001
658702
2207
01410000002
2200000700100010002
2200000700100020001
2200000700100020002
2200000700100030001
2200000700100030002
2200000700100040001
2200000700100040002
2200000700100050001
2200000700100050002
7400000900004330001
(18-56),(21-89)
7400000900004330002
21,22
6900000100009440001
6900000100009440002
6900000100009990001
2,16
6900000100009990002
(1-11),8 
6900000500002010001
6900000500002260001
28-35
2700000500004240001
41-51
2700000500004240002
1602900100000010001
423700
1682
1628
92240501000
1/1,1/2,1/3,1/4,1/5,1/6,1/7,1/8,1/9,1/10
1602900100000020001
1/19,1/20,1/21,1/22,1/23,1/24,1/25,2/1
1602900100000020002
2/2,2/3,2/4,2/5,2/6,2/7,2/8,2/9,2/11
1602900100000020003
2/13,2/14,2/15,2/16,3/1,3/2,3/3,3/4,3/5
1602900100000020004
3/6,3/7,3/8,3/9,3/10,3/11,3/12,3/13,3/14
1602900100000020005
3/15,3/15,4,5
1602900100000020006
1/11,1/12,1/13,1/14,1/15,1/16,1/17,1/18
1602900100000020007
1602900100000030001
1602900100000040001
1602900100000050001
1602900100000060001
1602900100000070001
1602900100000090001
1602900100000100001
1602900100000120001
1602900100000130001
1-86,88-148
1602900100000140001
1602900100000150001
1602900100000160001
1602900100000170001
1-126
1602900100000180001
1602900100000190001
1602900100000200001
1602900100000210001
1-93,96-106
1602900100000220001
1-158
1602900100000230001
1602900100000240001
1602900100000250001
1-102
1602900100000260001
1602900100000270001
1602900100000280001
1602900100000290001
1-144
1602900100000300001
1-130,132-186
1602900100000310001
1602900100000320001
1-138
1602900100000330001
1602900100000340001
1602900100000350001
1602900100000360001
1602900100000370001
1-79,81-125
1602900100000380001
1602900100000390001
1-80,82-145
1602900100000400001
1602900100000410001
1602900100000420001
1602900100000430001
1602900100000440001
1602900100000450001
1602900100000460001
1602900100000470001
1602900100000480001
1602900100000490001
1602900100000500001
1602900100000510001
1602900100000520001
1602900100000530001
1602900100000540001
1602900100000550001
1602900100000560001
1602900100000570001
1602900100000580001
1602900100000590001
1602900100000600001
1602900100000610001
1602900100000620001
1602900100000630001
1602900100000640001
1602900100000650001
1602900100000660001
1602900100000670001
1602900100000680001
1602900100000690001
1602900100000700001
1602900100000710001
1602900100000720001
1602900100000730001
1602900100000740001
5-15
1602900100000740002
1602900100000750001
1602900100000760001
1602900100000780001
1602900100000790001
1602900100000800001
1602900100000810001
1602900100000820001
1602900100000830001
1602900100000840001
1602900100000850001
1602900100000860001
1602900100000870001
1602900100000880001
3401100100004940002
(18-70),(1-57)
5600000100005380001
5600000100005380002
2500001200002150001
1-3,9,12,14,15,17,19-23,25,31,33,35,41
2500001100000650001
(24-999),(45-999)
2500001100000650002
2500000100005830001
(14-44),(21-47)
2500000100005830002
(3-21),(2-26)
6900000600003300001
29/37,(32-48),(50-68),45/46,59/43,47
6900000600003300002
6900000600003300003
5500000100061670001
(2-32),(3-17)
6500000100003530001
6500000100003530002
(12-34),(13-35)
6500000100003580001
(187-239),(196-336)
2600700200000010001
356801
2646
07402000000
(146-164),(147-165)
2600700200000020001
(78-98),(161-181)
2600700200000030001
(131-197),(202-306)
2600700200000040001
2600000200002760001
357623
2600000200002760002
7100000100002290001
(37-61),(24-82)
7100000100002290002
(63-85),(86-104)
7100000100002290003
7100000100002810001
7100000100002810002
23-99
7100000100002810003
84
7100000100002290004
6901600100000260001
14,
6901600100000260002
3600000100003090006
0201100100000860004
5,14,16,18,28,44,42,40,52,54,56,58,81
0200000500000460001
73,77,75,110,108,102
0200000500000460002
8-13,16-23,29,47,49-51,53,57,65,67,69,71
0200000500000320001
73,74,76,78,97,80
0200000500000320002
5,7,9,11,13,15,14,46,48,61,64,65,70,160,
0200000500000240001
166
0200000500000240002
108,110,112
0200000500001060001
3,7,8,9,10,12
0200000500000020002
(3-21),(25-29)
0200000500000390003
103,104
0200000500001070001
1,1,2,2,2
0204200100000120001
(3-301),100
0204200100000120002
453122
0204200100000280001
0204200100000280002
0204200100000280003
0204200100000930001
0204200100000930002
0204200100000930003
(66-300)
0204200100001110004
0204200100001520004
(6-300)
0204200100002560004
0204200100003550005
0204200100003550006
0204200100003630001
(2-172)
0204200100003630002
(174-300)
0204200100003630003
0204200100002020001
0204200100002020002
0204200100002020003
0204200100002020004
7800000000000010001
199034
7801
40263561000
7800000000000010002
199004
(46-60)
7800000000000010003
40263562000
7800000000000020001
7800000000000020002
199178
7800000000000020003
7800000000000030001
190005
7839
40262565000
(3-5),(4-16)
7800000000000030002
190103
(9-23),(18-26)
7800000000000030003
40262566000
7800000000000050001
199162
7800000000000050002
(34-68)
7800000000000050003
7800000000000050004
7800000000000060001
7800000000000060002
(7-27)
7800000000000060003
7800000000000070001
(11-27),(12-30)
7800000000000070002
(29-37),(32-36)
7800000000000070003
7800000000000080001
7800000000000080002
(42-80)
7800000000000080003
7800000000000100001
(19-41)
7800000000000100002
(43-99)
7800000000000100003
(10-36)
7800000000000110001
7800000000000110002
(38-90)
7800000000000110003
7800000000000120001
7800000000000120002
(41-99)
7800000000000120003
7800000000000130001
7800000000000130002
(32-72)
7800000000000130003
7800000000000140001
7800000000000140002
(35-53)
7800000000000140003
7800000000000150001
199106
7800000000000150002
7800000000000160001
7800000000000160002
7800000000000160003
7800000000000160004
7800000000000210001
7800000000000210002
3,(4-12)
7800000000000240001
7800000000000240002
40263563000
7800000000000270001
7800000000000270002
7800000000000270003
(60-62)
7800000000000270004
7800000000000290001
7800000000000290002
7800000000000290003
(57-67)
7800000000000290004
(14-42)
7800000000000300001
7800000000000300002
(44-62)
7800000000000300003
7800000000000300004
7800000000000310001
7800000000000310002
7800000000000310003
7800000000000310004
7800000000000320001
7800000000000320002
7800000000000320003
(72-86)
7800000000000320004
7800000000000330001
(21-45)
7800000000000330002
7800000000000330003
7800000000000330004
7800000000000340001
7800000000000340002
(42-60)
7800000000000340003
(64-80)
7800000000000340004
7800000000000350001
(3-25),(4-10)
7800000000000350002
7800000000000360001
191015
7842
40298564000
7800000000000360002
191036
(27-39),(10-32)
7800000000000360003
191144
7800000000000410001
191167
40298565000
7800000000000410002
191317
7800000000000460001
197372
7814
40270565000
(17-55),(12-44)
7800000000000460002
197373
40270566000
7800000000000460003
7800000000000470001
196066
7810
40284565000
(19-25),(18-44)
7800000000000470002
196135
7800000000000480001
197101
7813
40288563000
7800000000000480002
40288562000
7800000000000520001
198096
7805
40276564000
(17-31),(14-26)
7800000000000520002
198152
(33-39),(28-52)
7800000000000520003
198188
7800000000000620001
191186
7840
40298562000
7800000000000620002
190000
7838
40262563000
7800000000000670001
197045
40270563000
7800000000000670002
197183
(7-35),39,10,10,10,10,(12-22)
7800000000000680001
195009
7804
40273563000
7800000000000680002
194044
7802
40265561000
(37-43)
7800000000000680003
7800000000000730001
197198
8,(3-7)
7800000000000730002
197046
66,66,(1-27),(2-12)
7800000000000740002
192174
7811
40285563000
(35-39),(18-26)
7800000000000740003
7816
40296565000
(29-33)
7800000000000740004
192241
7800000000000770001
40284564000
(25-47)
7800000000000770002
196143
(5-23),(12-18)
7800000000000770003
7800000000000770004
(31-45),(26-44)
7800000000000780001
192286
40296564000
7800000000000780002
192239
7800000000000850001
190107
7800000000000850002
7800000000000850003
40262562000
7800000000001060001
197341
40270567000
27,(14-24)
7800000000001060002
197375
7800000000001080001
194356
40265566000
(9-37),(2-42)
7800000000001080002
7800000000001090001
197110
40288565000
(15-43),(14-44)
7800000000001090002
40288566000
7800000000001130001
40296562000
7800000000001130002
192236
(5-13)
7800000000001130003
192238
7800000000001130004
192242
40296561000
7800000000001130005
7800000000001130006
7800000000001130007
7800000000001140001
(13-35),(14-34)
7800000000001140002
(1-7),(4-12)
7800000000001150001
7841
40298561000
(25-69),(28-58)
7800000000001150002
(9-23),(14-26)
7800000000001150003
7800000000001180001
194214
(31-77),(38-106)
7800000000001180002
7800000000001190001
190068
(33-39),(26-36)
7800000000001190002
(17-41),(16-42)
7800000000001200001
195176
7806
40278562000
(45-61),(44-56)
7800000000001200002
195248
(5-15),(8-12)
7800000000001200003
195027
24,24/2
7800000000001210001
(1-9),(4-20)
7800000000001210002
7800000000001220001
40288561000
(15-31),(18-42)
7800000000001220002
(33-47),(44-64)
7800000000001220003
7800000000001230001
(17-27),(20-30)
7800000000001230002
7800000000001240001
(65-77),(68-92)
7800000000001240002
194100
(79-99),(94-108)
7800000000001240003
194156
(3-5),(2-12)
7800000000001250001
192029
40285561000
(7-17),(24-46)
7800000000001250002
192148
3,7£áª,58
7800000000001260001
195213
40285569000
56,(60-62)
7800000000001260002
40278563000
7800000000001270001
(121-137),(82-100)
7800000000001270002
192012
7800000000001270003
40285562000
(49-75),(28-44)
7800000000001270004
192171
(77-85),(46-52)
7800000000001270005
192131
(89-119),(60-80)
7800000000001270006
(56-58)
7800000000001270007
(23-27)
7800000000001310001
40270564000
7800000000001310002
197348
(7-21)
7800000000001310003
197227
7800000000001320001
7800000000001320002
191024
(27-33),(8-16)
7800000000001320003
7800000000001410001
(5-33),(4-32)
7800000000001410002
197136
40288564000
7800000000001420001
197022
7800000000001420002
197376
7800000000001420003
7800000000001430001
198099
40276565000
7800000000001430002
198097
7800000000001440001
191014
40298563000
(33-43),(22-38)
7800000000001440002
7800000000001450001
196105
40284562000
(8-10)
7800000000001450002
196128
40284563000
7800000000001450003
196247
7800000000001450004
196191
(27-39),(12-20)
7800000000001450005
196070
(41-47)
7800000000001450006
40284561000
(49-61)
7800000000001450007
(63-81)
7800000000001450008
196211
7800000000001450009
196244
(12-32)
7800000000001490001
192212
40296563000
7800000000001490002
(34-54)
7800000000001490003
(1-13),(6-8)
7800000000001520001
7800000000001520002
191028
7800000000001550001
7800000000001550002
197342
7800000000001630001
199397
7800000000001630002
199406
7800000000001630003
40263564000
(1-9),(4-30)
7800000000001630004
(37-81),(50-54)
7800000000001640001
195067
40278561000
7800000000001640002
195271
5,(2-36)
7800000000001640003
40273565000
7800000000001710001
(41-61),(16-48)
7800000000001710002
7800000000001710003
7800000000001710004
7800000000001710005
(13-23)
7800000000001750001
7800000000001750002
(25-61),(24-36),(56-66)
7800000000001750003
40270562000
7800000000001750004
7800000000001820001
193231
40285567000
7800000000001820002
193168
(21-39),(22-30)
7800000000001820003
193232
40285566000
(43-71),(38-56)
7800000000001820004
193315
40285565000
(73-81),(60-106)
7800000000001820005
193079
7800000000001820006
40285568000
7800000000001850001
7800000000001850002
(51-73)
7800000000001850003
(75-83),(96-106)
7800000000001850004
7800000000001850005
(56-62)
7800000000001850006
(64-94)
7800000000001850007
7800000000001870001
191119
40298566000
(19-37),(20-40)
7800000000001870002
(43-61),(42-116)
7800000000001870003
192007
7800000000001880001
191180
40262564000
7800000000001880002
7800000000001890001
(13-25),(8-20)
7800000000001890002
7800000000001920001
198328
7807
40279562000
7800000000001920002
198332
7800000000001960001
7800000000001960002
(3-11),(2-18)
7800000000001970001
195269
40273567000
(15-17),(20-30)
7800000000001970002
195297
(15-41)
7800000000002000001
7800000000002000002
7800000000002000003
(67-71),(70-90)
7800000000002000004
192284
(83-85),(92-100)
7800000000002000005
192281
40296566000
(87-103),(102-114)
7800000000002000006
192283
7800000000002000007
192071
7800000000002000008
7800000000002000009
7800000000002000010
7800000000002040001
7800000000002040002
195253
7800000000002060001
195256
40273561000
7800000000002060002
195220
7800000000002060003
7800000000002070001
192102
7800000000002070002
7800000000002070003
7800000000002070004
(112-130)
7800000000002070005
192288
7800000000002070006
192289
(46-72)
7800000000002070007
(74-102)
7800000000002070008
7800000000002090001
(9-15),(12-22)
7800000000002090002
(1-11),(22-34)
7800000000002190001
7800000000002190002
(25-65)
7800000000002190003
(67-79)
7800000000002190004
196240
(118-124)
7800000000002190005
7800000000002190006
7800000000002190007
(44-66)
7800000000002190008
(90-116)
7800000000002190009
7800000000002260001
7800000000002260002
7800000000002270001
190013
7800000000002270002
7800000000002310001
7800000000002310002
7800000000002310003
195273
7800000000002310004
121
7800000000002350001
198329
40279564000
7800000000002350002
198255
40276562000
(1-75),(38-52)
7800000000002350003
40276563000
(115-119),(118-126)
7800000000002350004
198205
(129-131)
7800000000002350005
40279563000
7800000000002350006
198264
(87-89),(76-104)
7800000000002350007
198260
(93-109),(106-114)
7800000000002350008
198261
(130-142)
7800000000002350009
198334
(144-158)
7800000000002350010
198259
40279565000
(160-184)
7800000000002350011
7800000000002350012
198215
40276561000
7800000000002350013
198217
7800000000002420001
7800000000002420002
7800000000002420003
(47-109),(26-108)
7800000000002420004
196233
7800000000002420005
7800000000002440001
191025
7800000000002440002
191002
7800000000002500001
7800000000002500002
7800000000002500003
(45-57),(34-46)
7800000000002500004
7800000000002500005
190031
(7-39),(20-42)
7800000000002510001
(2-4),5
7800000000002510002
7800000000002550001
7800000000002550002
7800000000002560001
7800000000002560002
7800000000002590001
7800000000002590002
7800000000002630001
7800000000002630002
(27-83),(38-122)
7800000000002630003
7800000000002650001
(15-31),(18-26)
7800000000002650002
(9-13),(2-16)
7800000000002650003
7800000000002660001
7800000000002660002
7800000000002660003
191123
7800000000002660004
7800000000002660005
7800000000002660006
73/1
7800000000002690001
7800000000002690002
7800000000002690003
7800000000002690004
7800000000002710001
194355
(1-13),(32-200)
7800000000002710002
7800000000002710003
7800000000002770001
(33-55),(24-58)
7800000000002770002
(1-15),(8-10)
7800000000002800001
7800000000002800002
7800000000002810001
7800000000002810002
7800000000002850001
11,(2-18)
7800000000002850002
191187
7,(15-21)
7800000000002880001
7800000000002880002
7800000000002880003
(1-35),(18-26)
7800000000002890001
7800000000002890002
7800000000002970001
(25-29),(2-24)
7800000000002970002
40273562000
(1-11),(6-22)
7800000000003010001
(19-45),(26-32)
7800000000003010002
7800000000003050001
(9-15),(4-8)
7800000000003050002
7800000000003140001
7800000000003140002
(29-57)
7800000000003140003
(59-79),(52-70)
7800000000003140004
7800000000003140005
7800000000003140006
191023
7800000000003150001
7800000000003150002
(105-113)
7800000000003170001
195265
40273564000
(115-131)
7800000000003170002
195299
(43-89),(54-98)
7800000000003170003
195257
(5-41),(4-26)
7800000000003170004
(104-130)
7800000000003170005
195267
(28-42)
7800000000003170006
(51-57),(24-64)
7800000000003180001
7800000000003180002
195196
7800000000003200001
7800000000003200002
7800000000003250001
7800000000003250002
7800000000003280001
(109-129),(78-120)
7800000000003280002
(131-133),(122-126)
7800000000003280003
40262561000
(135-139),(128-178)
7800000000003280004
190121
(23-47)
7800000000003280005
(49-55),(79-83)
7800000000003280006
(57-77),(42-62)
7800000000003280007
(85-107)
7800000000003280008
7800000000003280009
191011
7800000000003280010
(30-40)
7800000000003280011
7800000000003280012
7800000000003290001
(7-13),(18-26)
7800000000003290002
7800000000003300001
7800000000003300002
7800000000003300003
7800000000003300004
7800000000003340001
1,(9-35),(2-16)
7800000000003340002
7800000000003370001
195274
7800000000003370002
195276
7800000000003370003
40273566000
7800000000003370004
7800000000003390001
192076
40285564000
(5-11),(6-8)
7800000000003390002
192177
7800000000003400001
193230
(15-41),(30-46)
7800000000003400002
(43-51)
7800000000003400003
7800000000003400004
7800000000003400005
7800000000003400006
(48-82)
7800000000003400007
(17-37)
7800000000003420001
7800000000003420002
198262
(9-15),(8-10)
7800000000003420003
(12-38)
7800000000003420004
7800000000003490001
(13-41),(32-40)
7800000000003490002
7800000000003490003
7800000000003500001
7800000000003500002
7800000000003510001
(29-57),(34-64)
7800000000003510002
7800000000003580001
40279561000
7800000000003580002
198330
7800000000003660001
7800000000003660002
7800000000003660003
7800000000003660004
(3-47),(2-8)
7800000000003700001
(49-75),(10-20)
7800000000003700002
27,(24-34)
7800000000003710001
7800000000003710002
7800000000003720001
7800000000003720002
7800000000003750001
197371
7800000000003750002
7800000000003750003
7800000000003750004
7800000000003750005
áâà
7800000000003760001
7800000000003760002
7800000000003780001
(19-29),(30-44)
7800000000003780002
7800000000003860001
7800000000003860002
7800000000003880001
196158
28,(19-29)
7800000000003880002
(3-17),(10-26)
7800000000003880003
(31-45)
7800000000003880004
(49-61),(56-68)
7800000000003880005
7800000000003880006
(48-52)
7800000000003880007
7800000000003890001
7800000000003890002
7800000000003890003
7800000000003890004
7800000000003890005
7800000000003890006
7800000000003890007
7800000000003900001
7800000000003900002
7800000000004020001
(23-45),(32-44)
7800000000004020002
7800000000004080001
194354
40265565000
7800000000004080002
194352
(3-11),(2-16)
7800000000004080003
40265563000
7800000000004080004
7800000000004080005
194358
7800000000004080006
194295
7800000000004100001
194223
40265562000
62,(57-67),(20-22)
7800000000004100002
7800000000004120001
7800000000004120002
7800000000004120003
7800000000004120004
7800000000004130001
197082
(1-11),(15-41),(2-10)
7800000000004130002
(43-45)
7800000000004130003
1,(16-20)
7800000000004150001
7800000000004150002
7800000000004160001
(19-49),(24-40)
7800000000004160002
7800000000004230001
(1-37),(4-26)
7800000000004230002
195197
7800000000004240001
7800000000004240002
53,(30-38)
7800000000004240003
7800000000004250001
(3-17),(2-28)
7800000000004250002
198095
7800000000004260001
198207
7800000000004260002
7800000000004300001
(23-31)
7800000000004300002
(33-45)
7800000000004300003
(47-49),(46-76)
7800000000004300004
7800000000004300005
(1-21),(2-4)
7800000000004310001
7800000000004310002
(31-43),(42-46)
7800000000004310003
7800000000004330001
(11-17),(10-16)
7800000000004330002
(19-41),(18-40)
7800000000004330003
(25-33),(50-62)
7800000000004350001
(35-39),(66-74)
7800000000004350002
7800000000004350003
195221
7800000000004350004
7800000000004380001
(19-31),(67-77),(2-40),65
7800000000004380002
195112
(35-63),65ª2
7800000000004380003
7800000000004480001
(27-41),(16-26)
7800000000004480002
7800000000004490001
7800000000004490002
(11-19),(14-24)
7800000000004500001
7800000000004500002
7800000000004510001
7800000000004510002
7800000000004530001
7800000000004530002
23,(24-26)
7800000000004550001
197343
(3-13),(4-16)
7800000000004550002
7800000000004560001
(3-7),12
7800000000004560002
7800000000004680001
(3-9),(2-14)
7800000000004680002
7800000000004700001
7800000000004700002
7800000000004750001
7800000000004750002
7800000000004760001
195279
40278565000
(27-35),(26-44)
7800000000004760002
40278564000
(7-17),(6-24)
7800000000004760003
195426
7800000000004800001
194021
7800000000004800002
7800000000004800003
7800000000004830001
(33-41),(22-36)
7800000000004830002
195030
16,(9-31)
7800000000004830003
7800000000004830004
7800000000004860001
(1-13),(2-4),14
7800000000004860002
7800000000004880001
193318
(15-19),(20-22)
7800000000004880002
(21-35),(38-42)
7800000000004880003
7800000000004880004
7800000000004900001
7800000000004900002
7800000000004910001
7800000000004910002
7800000000004910003
197349
7800000000004910004
(17-25),(4-20)
7800000000004910005
7800000000004960001
191124
(1-23),(2-26),(40-42)
7800000000004960002
7800000000004990001
(21-31),(26-32),(54-60)
7800000000004990002
7800000000004990003
(34-52)
7800000000004990004
25,25/2
7800000000005090001
7800000000005090002
7800000000005090003
(27-75),(38-44)
7800000000005090004
(77-83),(48-68)
7800000000005090005
7800000000005090006
7800000000005130001
7800000000005130002
27,27,27,27
7800000000005130003
(1-41),(12-30)
7800000000005170001
7800000000005170002
7800000000005260001
7800000000005260002
7800000000005260003
195252
(35-45),(28-36)
7800000000005270001
(5-29),(2-22)
7800000000005270002
7800000000005290001
(13-23),(20-22)
7800000000005290002
7800000000005370001
196140
7800000000005540001
(19-29),(18-30)
7800000000005540002
(1-25),24
7800000000005550001
(27-41),(30-42)
7800000000005550002
7800000000005570001
7800000000005570002
7800000000005580001
7800000000005580002
7800000000005580003
193312
7800000000005580004
7800000000005580005
7800000000005580006
7800000000005580007
7800000000005600001
191040
(21-45),(20-46)
7800000000005600002
1,1/61,(6-8)
7800000000005610001
(13-15),(10-22)
7800000000005610002
7800000000005610003
(17-33),(26-36)
7800000000005610004
7800000000005620001
(15-27),(18-20)
7800000000005620002
(3-5),(2-6)
7800000000005660001
(7-17),(8-12)
7800000000005660002
7800000000005690001
7800000000005690002
(3-11),(2-10)
7800000000005690003
7800000000005690004
7800000000005690005
(39-69),(30-78)
7800000000005700001
(10-18)
7800000000005700002
195298
7800000000005700003
7800000000005710001
7800000000005710002
(7-19),(20-30)
7800000000005710003
7800000000005740001
198206
(15-27),(14-28)
7800000000005740002
(33-57),(34-58)
7800000000005740003
7800000000005760001
(13-67),(16-60)
7800000000005760002
(75-85)
7800000000005760003
(87-89),(62-72)
7800000000005760004
23,(1-17),(2-6)
7800000000005780001
7800000000005780002
190098
(19-23),(14-24)
7800000000005880001
199226
(29-41),(30-34),(46-50)
7800000000005880002
40263565000
7800000000005880003
199155
1,(10-12)
7800000000005880004
(23-31),(22-28)
7800000000005900001
7800000000005900002
(39-49),(42-54)
7800000000005900003
7800000000005900004
7800000000005910001
7800000000005910002
7800000000005950001
(3-13),(2-24)
7800000000005950002
(5-19),(4-12)
7800000000005970001
7800000000005970002
(45-47),(42-98)
7800000000005980001
7800000000005980002
(61-77)
7800000000005980003
7800000000005980004
(1-5),(4-8)
7800000000006000001
(29-71),(34-60)
7800000000006000002
(7-27),(10-30)
7800000000006000003
194017
(1-17),(10-98)
7800000000006010001
7800000000006010002
7800000000006010003
(27-33),(18-26)
7800000000006020001
7800000000006020002
7800000000006020003
7800000000006060001
7800000000006060002
19,(23-45),(12-14),(20-34)
7800000000006080001
21,(16-18)
7800000000006080002
7800000000006080003
(7-17),(51-55),(8-10)
7800000000006080004
7800000000006160001
(3-15),(4-30)
7800000000006160002
7800000000006230001
(3-27),(4-22)
7800000000006230002
7800000000006250001
5,(4-6)
7800000000006250002
7800000000006250003
(17-31),(12-14)
7800000000006280001
(7-11),4
7800000000006280002
(3-69),(2-48)
7800000000006290001
(71-95),(50-84)
7800000000006290002
(99-129)
7800000000006290003
(88-96)
7800000000006290004
(98-122)
7800000000006290005
(11-19),(10-18)
7800000000006360001
(3-9),2
7800000000006360002
7800000000006400001
7800000000006400002
7800000000006400003
7800000000006400004
(53-79)
7800000000006400005
7800000000006420001
(8-24),21
7800000000006420002
(1-41),43
7800000000006440001
7800000000006440002
7800000000006440003
7800000000006440004
7800000000006450001
7800000000006450002
(5-23),(2-10)
7800000000006450003
7800000000006480001
7800000000006480002
7800000000006480003
7800000000006480004
7800000000006480005
(21-23),(18-70)
7800000000006500001
(1-19),(6-16)
7800000000006500002
(71-87),(76-90)
7800000000006500003
(17-21),(18-20)
7800000000006510001
(23-33),(22-32)
7800000000006510002
(25-35),(34-48)
7800000000006520001
7800000000006520002
7800000000006520003
(5-11),(2-26)
7800000000006520004
7800000000006520005
7800000000006530001
(11-21),(14-20)
7800000000006530002
7800000000006530003
7800000000006570001
7800000000006570002
7800000000006570003
194291
40265564000
7800000000006570004
194292
7800000000006570005
7800000000006590001
(13-17),(8-14)
7800000000006590002
(19-23),(16-22)
7800000000006590003
(25-33),(24-36)
7800000000006590004
49,50
7800000000006600001
198035
7800000000006600002
(15-47),(16-48)
7800000000006600003
190020
1,(2-16)
7800000000006640001
(17-19),(18-24)
7800000000006640002
7800000000006660001
(29-67),(40-96)
7800000000006660002
(98-114)
7800000000006660003
(1-5),(9-15),(2-6)
7800000000006680001
8,(17-19)
7800000000006680002
(31-33),(10-32)
7800000000006680003
7800000000006740001
(9-41),(8-36)
7800000000006740002
7800000000006820001
(31-71),(12-26)
7800000000006820002
7800000000006870001
(7-19),(8-28)
7800000000006870002
7800000000006880002
7800000000006880003
7800000000006900001
(11-43)
7800000000006900002
(45-53),(48-52)
7800000000006900003
7800000000006900004
7800000000006900005
(101-103)
7800000000006910001
40276566000
(109-117),(116-118)
7800000000006910002
(119-123),120
7800000000006910003
(125-139),(122-144)
7800000000006910004
198216
(147-153),(148-160)
7800000000006910005
(155-157),(162-174)
7800000000006910006
(159-191),(176-178)
7800000000006910007
(67-81)
7800000000006910008
(87-99)
7800000000006910009
(102-110)
7800000000006910010
198303
(88-100)
7800000000006910011
146
7800000000006910012
7800000000006920001
(13-21),(10-20)
7800000000006920002
7800000000006930001
(11-15),(12-26)
7800000000006930002
7800000000006930003
(29-69),(28-54)
7800000000006930004
(71-97),(56-90)
7800000000006930005
(1-5),(17-19),(2-6)
7800000000006970001
7800000000006970002
(7-15),(21-37),(8-30)
7800000000006970003
7800000000006970004
(42-56)
7800000000006970005
7800000000007020001
7800000000007020002
(37-77),(48-66)
7800000000007020003
7800000000007020004
7800000000007020005
7800000000007080001
(13-23),(16-36)
7800000000007080002
(31-41),(40-54)
7800000000007080003
7800000000007100001
(153-279),(130-242)
7800000000007100002
(21-39),(2-12)
7800000000007100003
(281-293),(246-276)
7800000000007100004
196084
7800000000007100005
(91-151)
7800000000007100006
(24-84)
7800000000007100007
(86-128)
7800000000007100008
7800000000007120001
197374
7800000000007120002
63,(60-64)
7800000000007150001
7800000000007150002
(17-35),(8-34)
7800000000007150003
(37-61),(36-58)
7800000000007150004
7800000000007150005
7800000000007170001
(5-17)
7800000000007170002
7800000000007170003
7800000000007170004
5,12
7800000000007180001
7800000000007180002
(3-5),(2-10)
7800000000007220001
7800000000007220002
7800000000007230001
(7-13),(12-28)
7800000000007230003
7800000000007280001
7800000000007280002
(1-9),(38-46)
7800000000007280003
7800000000007280004
7800000000007280005
(104-112)
7800000000007280006
7800000000007280007
7800000000007280008
(78-82)
7800000000007280009
(86-98)
7800000000007280010
7800000000007280011
7800000000007340001
7800000000007340002
1,(4-8)
7800000000007360001
(7-21),(10-20)
7800000000007360002
(25-53),(26-54)
7800000000007360003
(55-61),(58-62)
7800000000007360004
(1-3),(9-13)
7800000000007450001
5,(2-18)
7800000000007450002
7800000000007470001
(15-23),(12-24)
7800000000007470002
29,(20-36)
7800000000007530001
(1-7),(4-10)
7800000000007530002
7800000000007540001
7800000000007540002
7800000000007570001
(33-67),(38-68)
7800000000007570002
(71-95),(112-118)
7800000000007570003
(72-108)
7800000000007570005
7800000000007630001
7800000000007630002
7800000000007630003
7800000000007630004
(49-55),(6-80)
7800000000007660001
(82-98)
7800000000007660002
(1-59),(28-62)
7800000000007690001
(63-77),(64-84)
7800000000007690002
7800000000007690003
(1-53),(26-32)
7800000000007700001
(55-57),(58-66)
7800000000007700002
(59-85),(68-86)
7800000000007700003
(87-89)
7800000000007700004
(2-24),(34-56)
7800000000007700005
7800000000007720001
(1-5),(4-12)
7800000000007720002
(7-19),(14-20)
7800000000007720003
81,(86-92)
7800000000007740001
7800000000007740002
(27-51)
7800000000007740003
(53-79),(56-84)
7800000000007740004
7800000000007740005
(48-54)
7800000000007740006
7800000000007780001
7800000000007780002
7800000000007820001
(47-57),(36-60)
7800000000007820002
7800000000007820003
7800000000007820004
7800000000007830001
(29-33),(22-32)
7800000000007830002
(35-47),(34-52)
7800000000007830003
(5-27),(8-18)
7800000000007830004
10,(5-13)
7800000000007840001
7800000000007840002
7800000000007840004
7800000000007840005
7800000000007840006
198302
7800000000007840007
(54-80)
7800000000007840008
(25-39),(46-62)
7800000000007850001
7800000000007850002
7800000000007850003
7800000000007860001
(1-23),(4-14)
7800000000007860002
(29-35),(22-40)
7800000000007860003
7800000000007950001
(7-55)
7800000000007950002
7800000000007980001
(37-45)
7800000000007980002
(5-35),(12-56)
7800000000007980003
7800000000008110001
7800000000008110002
(13-51),(36-68)
7800000000008120001
(3-9),(4-34)
7800000000008120002
(59-95),(84-114)
7800000000008120003
(97-119),(116-132)
7800000000008120004
7800000000008120005
7800000000008170001
(23-37),32
7800000000008170002
7800000000008200001
(13-39),(12-38)
7800000000008200002
1,(10-28)
7800000000008210001
7800000000008210002
15,17,(18-20)
7800000000008260001
15,15,(1-13),(2-16)
7800000000008260002
(27-29),(22-36)
7800000000008260003
7800000000008340001
7800000000008340002
7800000000008350001
(59-71),(46-54)
7800000000008350002
(73-101),(68-100)
7800000000008350003
(102-128)
7800000000008350004
(56-66)
7800000000008350005
7800000000008420001
7800000000008420002
(21-45),(44-50)
7800000000008420003
7800000000008520001
(135-149),(156-188)
7800000000008520002
149,149,149,149,149,(151-153)
7800000000008520003
(161-181)
7800000000008520004
(17-63)
7800000000008520005
(183-207)
7800000000008520006
(65-85)
7800000000008520007
(87-133),(62-152)
7800000000008520008
7800000000008520009
(190-194)
7800000000008520010
(198-204)
7800000000008520011
(206-224)
7800000000008520012
(3-35),(2-38)
7800000000008540001
(40-50)
7800000000008540002
1,2,12
7800000000008550001
(3-47),(4-10),(14-48)
7800000000008550002
7800000000008610001
7800000000008610002
7800000000008620001
(35-51),(28-40)
7800000000008620002
7800000000008620003
7800000000008650001
(5-33),(12-32)
7800000000008650002
7800000000008740001
(19-41),(10-24)
7800000000008740002
(3-17),(4-6)
7800000000008740003
7800000000008740004
7800000000008740005
7800000000008740006
7800000000008770001
(39-93),(38-98)
7800000000008770002
(1-65),(2-22)
7800000000008780001
(127-145)
7800000000008780002
(155-189)
7800000000008780003
(193-201)
7800000000008780004
62,(203-215)
7800000000008780005
(219-221)
7800000000008780006
(223-245)
7800000000008780007
84,(247-249)
7800000000008780008
(67-125),(24-26)
7800000000008780009
7800000000008780010
7800000000008790001
(1-19),(24-30)
7800000000008790002
7800000000008790003
7800000000008790004
7800000000008800001
(1-13),2
7800000000008800002
194064
7800000000008800003
(25-67),(18-28)
7800000000008800004
(69-79),(44-46)
7800000000008800005
7800000000008800006
7800000000008800007
7800000000008800008
7800000000008810001
7800000000008810002
7800000000008810003
7800000000008850001
(113-147)
7800000000008850002
(151-179)
7800000000008850003
7800000000008850004
(41-75)
7800000000008850005
(77-83)
7800000000008850006
7800000000008850007
(118-140)
7800000000008850008
(142-170)
7800000000008850009
(172-190)
7800000000008850010
7800000000008850011
(30-66)
7800000000008850012
(68-116)
7800000000008850013
7800000000008890001
7800000000008890002
7800000000008900001
7800000000008900002
(29-43),(40-60)
7800000000008900003
7800000000008910001
(17-53)
7800000000008910002
(7-15),(16-50)
7800000000008910003
7800000000008910004
(62-74)
7800000000008910005
23,(34-44)
7800000000008940001
7800000000008940002
7800000000008990002
(59-69),(46-96)
7800000000008990003
(73-79),(98-116)
7800000000008990004
(19-27),(26-28)
7800000000009010001
(3-17),(2-24)
7800000000009010002
(21-27),(24-32),(60-64)
7800000000009020001
(1-19),(6-22)
7800000000009020002
7800000000009220001
(13-101)
7800000000009220002
(18-48)
7800000000009220003
7800000000009240001
7800000000009240002
15,(6-14)
7800000000009260001
7800000000009260002
7800000000009280001
7800000000009280002
7800000000009350001
(37-65)
7800000000009350002
8,(37-69),(42-60)
7800000000009360001
(3-35),(12-30)
7800000000009360002
7800000000009370001
(15-21)
7800000000009370002
7800000000009380001
7800000000009380002
7800000000009390001
7800000000009390002
7800000000009410001
(43-61)
7800000000009410002
(42-62)
7800000000009410003
7800000000009440001
(25-39),(24-46)
7800000000009440002
(3-27),(6-28)
7800000000009450001
(35-39),(34-40)
7800000000009450002
7800000000009460001
7800000000009460002
7800000000009460003
7800000000009470001
(131-167),(110-118)
7800000000009470002
(173-191)
7800000000009470003
(193-229),(134-158)
7800000000009470004
(231-235)
7800000000009470005
7800000000009470006
7800000000009470007
7800000000009470008
7800000000009470009
(122-132)
7800000000009470010
7800000000009470011
192019
7800000000009470012
(74-98)
7800000000009470013
(1-7),(4-8)
7800000000009480001
(9-37),(10-26)
7800000000009480002
7800000000009490001
(3-7),(2-4)
7800000000009490002
7800000000009540001
163
7800000000009540002
195
7800000000009540003
(197-209)
7800000000009540004
(127-161)
7800000000009540005
(215-269),(108-114)
7800000000009540006
(271-297),(116-138)
7800000000009540007
(51-123),(38-94)
7800000000009540008
(7-49),(20-36)
7800000000009540009
(140-142)
7800000000009540010
(144-146)
7800000000009540011
7800000000009540012
7800000000009600001
(27-45),38
7800000000009600002
(47-59),(40-60)
7800000000009600003
7800000000009670001
7800000000009670002
(112-124)
7800000000009670003
193149
3,(2-38)
7800000000009670004
193091
(46-56)
7800000000009670005
(13-29),(60-110)
7800000000009670006
7800000000009710001
(31-33),(26-32)
7800000000009710002
7800000000009720001
7800000000009720002
(1-29),(2-12)
7800000000009760001
(33-35),16
7800000000009760002
(19-29),(16-24)
7800000000009790001
7800000000009790002
7800000000009800001
(15-37),(12-26)
7800000000009800002
(3-29),(2-46)
7800000000009810001
7800000000009810002
(53-65),50
7800000000009810003
7800000000009820001
(1-11),(4-20)
7800000000009820002
7800000000009820003
7800000000009950001
7800000000009950002
(5-31),(12-16)
7800000000010010001
7800000000010010002
7800000000010020001
3,8
7800000000010020002
7800000000010030001
7800000000010030002
7800000000010030003
7800000000010140001
7800000000010140002
(3-29)
7800000000010250001
7800000000010250002
7800000000010250003
(17-53),(4-24)
7800000000010260001
7800000000010260002
7800000000010280001
(29-47),(30-32)
7800000000010280002
6,(1-13)
7800000000010380001
(19-37)
7800000000010380002
6/8
7800000000010390001
7800000000010390002
11,11/15
7800000000010400001
(3-9),(13-17),(4-14)
7800000000010400002
7800000000010460001
7800000000010460002
(71-95),(74-90)
7800000000010460003
7800000000010540001
7800000000010540002
(13-15),(10-16)
7800000000010590001
7800000000010590002
4,(3-23)
7800000000010640001
2,(6-24)
7800000000010640002
7800000000010660001
(27-35),(12-22),(46-50)
7800000000010660002
(37-69),24,(30-44)
7800000000010660003
(5-21),(6-10)
7800000000010660004
7800000000010660005
7800000000010680001
(7-29),(4-18)
7800000000010680002
7800000000010720001
(31-59)
7800000000010720002
(63-161),(142-144)
7800000000010720003
7800000000010720004
7800000000010720005
(32-52)
7800000000010720006
7800000000010720007
7800000000010720008
7800000000010740001
7800000000010740002
7800000000010740003
7800000000010750001
7800000000010750002
(7-15),(4-14)
7800000000010770001
(17-23),(16-20)
7800000000010770002
7800000000010780001
7800000000010780002
7800000000010820001
(13-31),(16-28)
7800000000010820002
(33-55)
7800000000010820003
(34-48)
7800000000010820004
7800000000010850001
(27-35),(22-32)
7800000000010850002
7800000000010850003
7800000000010850004
7800000000010850005
(3-45),(8-28)
7800000000010880001
7800000000010880002
7800000000011010001
7800000000011010002
7800000000011010003
7800000000011010004
7800000000011010005
7800000000011010006
7800000000011030001
7800000000011030002
7800000000011030003
7800000000011040001
(39-77),(10-54)
7800000000011040002
(7-37)
7800000000011040003
(83-87)
7800000000011040004
7800000000011040005
7800000000011160001
7800000000011160002
7800000000011160003
7800000000011170001
(11-17),(2-22)
7800000000011170002
(17-31)
7800000000011180001
7800000000011180002
(33-41),(22-50)
7800000000011180003
7800000000011180004
7800000000011210001
7800000000011210002
7800000000011260001
(17-19),(4-46)
7800000000011260002
7800000000011270001
(6-46)
7800000000011270002
7800000000011320001
(7-15),(6-16)
7800000000011320002
7800000000011330001
(15-23),(18-22)
7800000000011330002
(27-33),30
7800000000011330003
(5-13),(10-16)
7800000000011330004
(3-89),(4-32)
7800000000011360001
(91-169),(36-58)
7800000000011360002
7800000000011410001
(5-9),(8-16)
7800000000011410002
29,35/1,(37-49)
7800000000011460001
7800000000011460002
7800000000011460003
(68-72)
7800000000011460004
7800000000011460005
7800000000011460006
7800000000011460007
(5-19),(10-16)
7800000000011460008
7800000000011460009
(87-99),(82-86)
7800000000011460010
(100-114)
7800000000011460011
7800000000011460012
7800000000011460013
7800000000011460014
7800000000011460015
7800000000011470001
7800000000011470002
7800000000011490001
(31-47),(24-46)
7800000000011490002
7800000000011570001
7800000000011570002
7800000000011610001
78,80,88,88/2,(27-107),(82-86)
7800000000011610002
7800000000011610003
(42-48)
7800000000011610004
7800000000011720001
(39-41),(38-46)
7800000000011720002
7800000000011750001
7800000000011750002
(31-43),(34-46)
7800000000011750003
7800000000011790001
7800000000011790002
7800000000011810001
7800000000011810002
7800000000011830001
7800000000011830002
7800000000011830003
(35-45)
7800000000011830004
(63-69),(88-102)
7800000000011830005
(73-87),(106-120)
7800000000011830006
7800000000011830007
(48-58)
7800000000011830008
(64-84)
7800000000011830009
8,12
7800000000011860001
7800000000011860002
(2-6),10,(14-20)
7800000000011860003
(1-19),(4-14)
7800000000011880001
(21-45),(16-40)
7800000000011880002
7800000000011890001
7800000000011890002
7800000000011950001
(23-43),(40-60)
7800000000011950002
(45-51),(62-80)
7800000000011950003
7800000000011960001
(13-41),(6-16)
7800000000011960002
(43-55),(18-24)
7800000000011960003
(57-117)
7800000000011960004
7800000000011970001
7800000000011970002
7800000000011970003
7800000000012000001
(19-25),(18-32)
7800000000012000002
7800000000012020001
(19-23),(30-48)
7800000000012020002
7800000000012040001
(9-29),(18-40)
7800000000012040002
7800000000012050001
7800000000012050002
7800000000012050003
7800000000012070001
(61-79),(48-70)
7800000000012070002
7800000000012220001
7800000000012220002
7800000000012230001
(15-31),(6-18)
7800000000012230002
(33-41),(20-26)
7800000000012230003
7800000000012280001
7800000000012280002
(3-21),2
7800000000012350001
7800000000012350002
(1-71),(4-82)
7800000000012370001
(77-169),(104-140)
7800000000012370002
7800000000012380001
(17-19),(16-22)
7800000000012380002
(21-31),(24-36)
7800000000012380003
(33-45),(38-44)
7800000000012380004
(47-57),(46-62)
7800000000012380005
7800000000012380006
(69-75),(64-74)
7800000000012380007
(77-129),(76-128)
7800000000012380008
7800000000012410001
7800000000012410002
(11-15),(4-20)
7800000000012410003
7800000000012450001
(17-23),(18-24)
7800000000012450002
7800000000012500001
7800000000012500002
(46-64)
7800000000012500003
7800000000012530001
7800000000012530002
(109-123),(64-80)
7800000000012530003
(51-63)
7800000000012530004
(69-81),(32-48)
7800000000012530005
195427
(91-107),(52-62)
7800000000012530006
7800000000012530007
7800000000012540001
7800000000012540002
7800000000012540003
(1-13),(6-18)
7800000000012550001
(15-19),(24-30)
7800000000012550002
(27-49),(32-50)
7800000000012550003
7800000000012580001
7800000000012580002
44,(51-75)
7800000000012580003
7800000000012580004
7800000000012580005
7800000000012580006
7800000000012580007
7800000000012580008
55/1,55/2,(57-75),(58-88)
7800000000012600001
7800000000012600002
(13-35),(16-44)
7800000000012600003
(37-53),55,(46-56)
7800000000012600004
(77-83),(92-96)
7800000000012600005
(85-113),(98-164)
7800000000012600006
1,2
7800000000012670001
2,2,4
7800000000012670002
(3-13),(6-32)
7800000000012670003
(27-73),(40-68)
7800000000012670004
(11-15),(12-28)
7800000000012680001
(21-37),(30-38)
7800000000012680002
(5-9),(2-6)
7800000000012680003
(15-19),(12-14)
7800000000012730001
(21-25),(20-34)
7800000000012730002
7800000000012760001
(34-82)
7800000000012760002
(11-15),(14-26)
7800000000012770001
(3-5),(4-12)
7800000000012770002
(19-25),(14-22)
7800000000012780001
7800000000012780002
7800000000012820001
7800000000012820002
7800000000012830001
7800000000012830002
7800000000012830003
7800000000012830004
7800000000012830005
(38-40)
7800000000012830006
7800000000012830007
7800000000012880001
7800000000012880002
(3-31)
7800000000012880003
25,27,(16-20)
7800000000013000001
(3-25),(2-14)
7800000000013000002
7800000000013010001
(13-21),(34-50)
7800000000013010002
(3-33),(4-28)
7800000000013020001
(35-49),(32-46)
7800000000013020002
7800000000013030001
(35-49)
7800000000013030002
7800000000013030003
7800000000013040001
(29-39),(24-36)
7800000000013040002
7800000000013050001
(25-39),(32-44)
7800000000013050002
7800000000013060001
(31-57),(32-62)
7800000000013060002
(1-5),(4-6)
7800000000013110001
(19-35),(18-22)
7800000000013110002
(7-15),(8-14)
7800000000013110003
7800000000013140001
(9-17),(12-16)
7800000000013140002
35,52
7800000000013200001
5,4
7800000000013200002
(17-29),(6-18)
7800000000013200003
(31-33),(37-57),(20-50)
7800000000013200004
(77-99),(72-94)
7800000000013200005
(59-71),(54-66)
7800000000013200006
(1-21),(12-28)
7800000000013220001
7800000000013220002
(1-31),(12-30)
7800000000013240001
7800000000013240002
(1-19),(29-51),(2-52)
7800000000013290001
7800000000013290002
7800000000013290003
7800000000013300001
(45-75)
7800000000013300002
7800000000013300003
(81-85),(93-103),(84-106)
7800000000013300004
(87-91)
7800000000013300005
7800000000013300006
(40-72)
7800000000013300007
(74-82)
7800000000013300008
(29-33),(34-36)
7800000000013390001
7800000000013390002
(5-13),(4-6)
7800000000013390003
7800000000013420001
7800000000013420002
7800000000013460001
(7-21),(8-18)
7800000000013460002
7800000000013470001
(5-9),(2-4)
7800000000013470002
7800000000013480001
74,74/1
7800000000013480002
7800000000013480003
7800000000013480004
(111-119)
7800000000013480005
(25-47),(26-46)
7800000000013480006
(55-79),(80-96)
7800000000013480007
7800000000013480008
(118-172)
7800000000013480009
(182-226)
7800000000013480010
(48-66)
7800000000013480011
7800000000013480012
(27-41),(26-38)
7800000000013510001
7800000000013510002
(17-19),(6-24)
7800000000013560001
7800000000013560002
65,(60-62)
7800000000013580001
67/69
7800000000013580002
191311
7800000000013580003
7800000000013580004
(51-63),(32-56)
7800000000013580005
(1-23),(6-40)
7800000000013590001
(99-109)
7800000000013590002
7800000000013590003
(73-75),(46-62)
7800000000013590004
7800000000013590005
7800000000013600001
7800000000013600002
7800000000013610001
7800000000013610002
7800000000013610003
7800000000013690001
7800000000013690002
7800000000013720001
(5-13),(2-20)
7800000000013720002
7800000000013720003
7800000000013730001
(11-31),(22-38)
7800000000013730002
(7-9),(2-16)
7800000000013730003
(1-9),15,(2-8)
7800000000013810001
(11-13),(17-31),(10-22)
7800000000013810002
7800000000013820001
7800000000013820002
7800000000013840001
(33-37),(30-34)
7800000000013840002
(1-39),(4-24)
7800000000013860001
7800000000013860002
7800000000013860003
7800000000013860004
7800000000013890001
(7-23),(10-30)
7800000000013890002
7800000000013900001
(3-25),(8-18)
7800000000013900002
22/47,(32-40)
7800000000013900003
7800000000013900004
7800000000013940001
(25-39)
7800000000013940002
7800000000013940003
(15-19),76
7800000000013950001
(3-11),(2-70)
7800000000013950002
2,2/1,2/2
7800000000013970001
(1-13),(20-32)
7800000000013970002
7800000000013970003
15,(18-32)
7800000000014020001
7800000000014020002
7800000000014030001
7800000000014030002
7800000000014100001
(13-27),(14-24)
7800000000014100002
(3-11),(4-12)
7800000000014100003
7800000000014110001
7800000000014110002
(1-7),(2-46)
7800000000014120001
7800000000014120002
7800000000014120003
7800000000014140001
(1-5),2,6
7800000000014140002
(15-27),24
7800000000014200001
(29-43),(36-50)
7800000000014200002
(3-11),(4-18)
7800000000014200003
35,(36-38)
7800000000014230001
7800000000014230002
7800000000014240001
(15-21),(8-18)
7800000000014240002
(23-35),(20-32)
7800000000014240003
7800000000014240004
7800000000014240005
(1-17),4,8
7800000000014270001
(27-41),(22-24)
7800000000014270002
7800000000014280001
(15-17),(22-26)
7800000000014280002
(15-33),(16-42)
7800000000014340001
(39-49),(46-56)
7800000000014340002
(1-25),(2-6)
7800000000014360001
(27-57),(8-40)
7800000000014360002
6,(5-17),(16-32)
7800000000014440001
2,(8-14)
7800000000014440002
7800000000014490001
7800000000014490002
7800000000014510001
(5-23),(6-18)
7800000000014510002
7800000000014520001
7800000000014520002
7800000000014520003
7800000000014660001
7800000000014660002
7800000000014670001
(119-141)
7800000000014670002
(143-161)
7800000000014670003
(163-203)
7800000000014670004
7800000000014670005
(57-79)
7800000000014670006
7800000000014670007
7800000000014670008
(106-110)
7800000000014670009
(112-136)
7800000000014670010
(138-154)
7800000000014670011
(156-166)
7800000000014670012
(168-182)
7800000000014670013
7800000000014670014
7800000000014670015
7800000000014670016
7800000000014670017
(50-68)
7800000000014670018
(70-74)
7800000000014670019
191038
7800000000014670020
(88-104)
7800000000014670021
7800000000014690001
(7-29),(10-24)
7800000000014690002
27,36
7800000000014720001
7800000000014720002
(29-49),(38-62)
7800000000014720003
7800000000014730002
7800000000014730003
7800000000014730004
(3-11),(4-14)
7800000000014760001
17,(18-26)
7800000000014760002
7800000000014770001
(31-35),(20-22)
7800000000014770002
8,(1-15)
7800000000014810001
7800000000014810002
7800000000014820001
7800000000014820002
7800000000014850001
7800000000014850002
7800000000014850003
7800000000014850004
7800000000014850005
7800000000014850006
(1-51),(2-42)
7800000000014880001
7800000000014880002
7800000000014900001
7800000000014900002
7800000000014920001
7800000000014920002
(29-57),(16-38)
7800000000014920003
(59-83),(40-62)
7800000000014920004
7800000000014930001
(13-25),(10-30)
7800000000014930002
(20-22)
7800000000014960001
(3-19),(38-44)
7800000000014960002
7800000000014960003
7800000000014960004
(36-48)
7800000000014990001
5,(4-34)
7800000000014990002
(17-25),(10-16)
7800000000015000001
(3-15),(2-8)
7800000000015000002
7800000000015030001
7800000000015030002
7800000000015070001
7800000000015070002
7800000000015080001
7800000000015080002
7800000000015090001
(57-73),(44-60)
7800000000015090002
7800000000015130001
7800000000015130002
7800000000015130003
7800000000015130004
7800000000015130005
(46-48)
7800000000015130006
7800000000015130007
7800000000015140001
2,(14-52)
7800000000015140002
7800000000015150001
7800000000015150002
7800000000015160001
7800000000015160002
7800000000015170001
(5-17),(6-14)
7800000000015170002
7800000000015190001
(15-57),(18-22)
7800000000015190002
(59-87),(26-58)
7800000000015190003
9,(2-10)
7800000000015190004
(15-17),(10-20)
7800000000015200001
7800000000015200002
7800000000015240001
(17-39),(22-38)
7800000000015240002
51,(50-52)
7800000000015290001
7800000000015290002
(17-25),(2-18)
7800000000015310001
7800000000015310002
(67-77),(86-132)
7800000000015320001
(1-43),(2-76)
7800000000015320002
7800000000015330001
7800000000015330002
7800000000015390001
(23-35),(22-36)
7800000000015390002
7800000000015390003
(45-51),(48-68)
7800000000015390004
(53-55)
7800000000015390005
7800000000015480001
(121-139)
7800000000015480003
(141-153)
7800000000015480004
(41-69),(50-68)
7800000000015480005
(71-101),(70-104)
7800000000015480006
(116-144)
7800000000015480007
(150-156)
7800000000015480008
(107-119)
7800000000015480009
(45-59),(38-74)
7800000000015490001
7800000000015490002
(9-41),(14-36)
7800000000015490003
7800000000015500001
(45-53),(44-56)
7800000000015500002
7800000000015500003
7800000000015530001
7800000000015530002
(29-41)
7800000000015530003
(45-77)
7800000000015530004
7800000000015530005
7800000000015530006
7800000000015530007
7800000000015530008
7800000000015530009
7800000000015530010
31,(34-38)
7800000000015550001
7800000000015550002
(50-116)
7800000000015550003
7800000000015590001
7800000000015590002
7800000000015590003
7800000000015610001
7800000000015610002
15,4
7800000000015700001
7800000000015700002
7800000000015710001
(23-47),(12-36)
7800000000015710002
(55-99),(38-82)
7800000000015710003
(29-37),(30-42)
7800000000015720001
7800000000015720002
7800000000015750001
7800000000015750002
7800000000015750003
(65-77),(54-86)
7800000000015750004
(79-103),(88-108)
7800000000015750005
(2-32),(36-52)
7800000000015750006
7800000000015890001
12,(1-9)
7800000000015900001
7800000000015910001
(13-19),(6-18)
7800000000015910002
7800000000017070001
(32-68)
7800000000017070002
(1-17),(14-16)
7800000000017080001
(31-75),(44-52)
7800000000017080002
7800000000017780001
(15-19),26
7800000000017780002
(21-39),(28-48)
7800000000017780003
(41-61),(50-62)
7800000000017780004
7800000000017780005
7800000000017840001
(21-25),(18-36)
7800000000017840002
7800000000018600001
(1-91),(4-46)
7800000000018600002
7800000000018610001
61,(70-84)
7800000000018610002
7800000000018620001
7800000000018620002
(27-41),(26-50)
7800000000018700001
7800000000018700002
(53-69),(60-62)
7800000000018700003
7800000000200110001
197704
7843
40281520000
(179-191),(170-206),(212-254)
7800000000200210001
7800000000300440001
196631
7820
40294551000
8,90,(41-125)
7800000000600100001
198323
7800000000600100002
40279566000
(19-43),(20-76)
7800000000700070001
460,(479-483)
7800000001200640001
197733
40281552000
(1-69),(2-92)
7800000001400120001
197229
40270561000
7800000001400250001
135,(16-168)
7800000001600550001
197755
40270555000
(649-671),(648-660)
7800000002000080001
197729
40281553000
(71-143),(96-122)
7800000002100350001
(351-367),(202-212)
7800000002200070001
40265558000
(369-507),(214-364)
7800000002200070002
194362
(1-67),(4-46)
7800000002200250001
(79-113),80,90
7800000002200250002
194294
2,(13-17)
7800000002200650001
1,13
7800000002201200001
(158-162)
7800000002201220001
96
7800000002400510001
7817
40277552000
(1-73),(2-82)
7800000002500350001
196643
40277553000
(19-67),(36-154)
7800000002600090001
(409-471),(390-470)
7800000002700330001
197738
40281555000
(637-647),(638-646)
7800000002900050001
40281556000
(673-707),(672-712)
7800000003100040001
40281557000
(351-407),(364-386)
7800000003200370001
197739
40281558000
7800000003600250001
196625
40294555000
(605-635),(600-632)
7800000003800250001
197720
40281559000
7800000003800260001
160,(9-31),(191-241)
7800000003900100001
196626
40294559000
80/2,88,(50-72)
7800000003900110001
7800000004000380001
198515
7819
40290555000
2,(7-11)
7800000004000540001
109/1,(1-107),(2-120)
7800000004000730001
(505-601),(500-598)
7800000200001060001
40281509000
7800000300000140001
196657
40277501000
7800000300000140002
196650
7800000300000140003
196653
(1-19),(6-42)
7800000300000150001
(21-33),(81-91),(48-54)
7800000300000150002
11,117,56,(10-16)
7800000300000390001
5,(2-8)
7800000300000390002
(1-23),(4-24)
7800000300000460001
(25-101),(30-74)
7800000300000460002
(1-65),(38-98)
7800000300000590001
7800000300000590002
(5-143),88
7800000300000670001
7800000300000670002
4,(1-35)
7800000500000390001
197762
40280501000
36,(37-49)
7800000500000390002
197760
7800000700000870001
196620
40294502000
(17-65),20
7800000700000870002
196621
7800000700001030001
7800000800000230001
198516
40290501000
7800000800000230002
198510
7800000800000980001
(1-31),(6-30)
7800000800001500001
7800000800001500002
7800000800001890001
(47-67),(50-60)
7800000800001890002
7800000800002720001
7800000800002720002
109,(113-119),(130-140)
7800000800003190001
7800000800003210001
(1-21),(6-22)
7800000900000020001
196608
40294501000
(23-29),(24-50)
7800000900000020002
196607
7800000900000030001
7800000900000030002
196605
7800000900000110001
(43-47),(20-34)
7800000900000110002
196606
11,(8-56)
7800000900000370001
7800000900000370002
196601
(58-82)
7800000900000370003
7800000900000420001
(16-68)
7800000900000570001
(1-79),(2-40)
7800000900000580001
(83-99)
7800000900000580002
(1-17),(2-42)
7800000900000670001
(21-53),(50-78)
7800000900000670002
7800000900000930001
(35-53),24
7800000900000930002
29,(16-22),(34-50)
7800000900000930003
(1-49),(2-24)
7800000900000940001
(51-73),(40-66)
7800000900000940002
(7-9),(2-26)
7800000900000970001
196602
(40-68)
7800000900000970002
196603
7800000900001000001
(3-31),(6-10)
7800000900001000002
(1-51),(34-54)
7800000900001080001
7800000900001080002
7800000900001120001
7800000900001120002
7800000900001240001
7800000900001240002
7800001000000480001
197706
(9-13),(20-32)
7800001000000480002
7800001000000530001
7800001000000530002
(251-291),(256-352)
7800001000000560001
20,20,22,22,22
6000000100004500003
6000000100001050001
180022
6000000102700010001
11
6000000102700010002
7001100000100130001
636330
7027
7010
69240825001
7001100000100130002
636331
(1-73),(2-74)
7001100000100610001
(75-99),(76-100)
7001100000100610002
6600000200000000001
624260
6603
65409000000
6600000200000000002
6600000200000000003
6600000200000000004
6600000200000000005
1001400100000010001
186424
1032
1006
86245501000
1,1 ,3,3 ,5
1001400100000040001
12-25
1001400100000010002
186422
2,2 ,2¡,4,6,8,10
1001400100000040002
1001400100000620001
23-39
1001400100000620002
3401800100004070001
403342
3456
3437
18420000000
(1-17),(4-26)
3401800100004070002
403343
2,4,6,8,10,12,14,16,18,20,22,24,26,28,30
3400000100028780001
32,34,36,38,40,42,44,46,48,50
3400000100028780002
1,2,4,6,7,8,9,11,13,15
3400000100028800001
1,2,3,4,5,6,7,8,9,11,13,15,17
3400000100028810001
2,4,6,8,10,12,14,16,18,20
3400000100028830001
1,3,5,7,9,11,13,15,17,19,21
3400000100028840001
3,9,11,13,15,17,19,21,23,25,27,29,31
3400000100028850001
(2-12),(1-17)
3400000100028870001
(14-16),(1-17)
3400000100028900001
1,2,3,4,5,6,7,8,9,10,11,12,13
3400000100028910001
3400000100028790001
3400000100028820001
3400000100028860001
3400000100028880001
3400000100028890001
3400000100028920001
3400000100028930001
(2-6),(3-5)
3400000100028940001
400062
3400000100028950001
3400000100028970001
3400000100028960001
3400000100028980001
400034
(111-137),(112-126)
3400000100006180005
400067
(55-75),(2-14)
3400000100012760002
(77-115),(16-30)
3400000100012760004
(32-84),(117-147)
3400000100012760005
400079
(97-109),(64-106)
3400000100006180009
(141-173),(128-162)
3400000100006180011
3400000100015110002
(73-77),22,28,30
3400000100015110004
(105-123),4
3400000100014190002
(125-139)
3400000100014190003
(115-187),(70-82)
3400000100013030003
(223-265),(84-90)
3400000100013030005
(117-181),(116-182)
3400000100014830003
(203-261),(184-266)
3400000100014830005
(1-37),(12-32)
3400000100015180003
(183-251),(186-250)
3400000100014420003
(253-295),(252-314)
3400000100014420005
(83-147),(126-204)
3400000100014740003
(149-217),(206-272)
3400000100014740005
(1-117),(2-110)
3400000100013290002
(123-201),(116-188)
3400000100013290004
(203-269),(192-258)
3400000100013290006
3400000100013400001
(6-40)
3400000100026410003
(113-133)
5500000100011140004
(1-189),(2-174)
4500800100000330001
641703
4506
4509
37212501000
(195-261),(176-244)
4500800100000330002
641700
4501000100001220001
641431
4526
4511
37216501000
21,(26-28)
4501000100001220002
641430
4501000100000150001
641432
(43-107),(46-108)
4501000100000150002
4501000100000390001
(11-33),(18-42)
4501000100000390002
(1-43),(2-68)
4501000100000520001
(45-107),(70-128)
4501000100000520002
4501000100000530001
(17-51),(18-60)
4501000100000530002
4501000100000670001
(25-101),(22-90),20
4501000100000670002
4501000100000650001
(35-43),(26-38)
4501000100000650002
4501000100000690001
4501000100000690002
4501000100001110001
(25-125),(42-152)
4501000100001110002
(3-27),(4-24)
4501000100001120001
(29-43),(26-40)
4501000100001120002
4501000100001150001
(3-23),(10-36)
4501000100001150002
4501000100001410001
(19-51),(30-66)
4501000100001410002
4501500100000150001
641640
4512
4516
37226501000
(115-149),(88-126)
4501500100000150002
641642
7,(2-8)
4501500100000160001
(91-121),(34-120)
4501500100000160002
4502300100000020001
641100
4524
37242501000
4502300100000020002
641102
4502300100000190001
(37-107),(44-94)
4502300100000190002
4502300100000620001
(33-53),(36-42)
4502300100000620002
4502300100000820001
(11-31),(10-32)
4502300100000820002
4502300100000880001
41,44
4502300100000880002
4502300100000940001
(41-59),(32-50)
4502300100000940002
4502300100001160001
(20-26)
4502300100001160002
(1-87),(2-6)
4502300100001210001
(89-233),(14-168)
4502300100001210002
4502300100001310001
(13-31),(10-32)
4502300100001310002
(1-49),(2-40)
4500000100000200001
640006
4501
37401000000
(51-123),(42-46)
4500000100000200002
640022
(1-41),(2-28)
4500000100000280001
(43-97),(30-72)
4500000100000280002
4500000100000400001
(33-57),(46-60),(82-94)
4500000100000400002
13,17,98,79,96
4500000100000400003
640027
(35-109),(34-62)
4500000100000460001
640000
4500000100000460002
640020
(2-138)
4500000100000490001
640015
4500000100000490002
640011
4500000100000590001
640026
(15-109),(121-157),(34-90)
4500000100000590002
153,(159-205),92,(100-128)
4500000100000590003
4500000100000590004
(35-107),(36-100)
4500000100000610001
(227-253),(228-236)
4500000100000610002
(207-209),(170-216)
4500000100000610003
(109-159),(106-168)
4500000100000610004
640018
(1-17),(2-34)
4500000100000610005
(21-101),(18-74)
4500000100000670001
640007
(1-19),(2-8)
4500000100000670002
640004
4500000100000720001
4500000100000720002
640003
4500000100000730001
(31-61),(28-70)
4500000100000730002
3,(7-9),(20-22)
4500000100000880001
63,(42-48)
4500000100000880002
(1-25),(4-12)
4500000100000960001
(27-101),(36-98)
4500000100000960002
35,37,(52-64)
4500000100000990001
640001
7,15,(16-20)
4500000100000990002
4500000100000990003
(15-127),(34-88)
4500000100001070001
13,(2-12)
4500000100001070002
(63-117),(58-108)
4500000100001110001
4500000100001110002
4500000100001110003
(5-43),(2-56)
4500000100001130001
(47-95),(64-82)
4500000100001130002
(97-165),(142-176)
4500000100001130003
(1-115),(4-8)
4500000100001150001
4500000100001150002
(37-87),(30-70)
4500000100001180001
(15-27),(14-26)
4500000100001180002
(1-79),(2-60)
4500000100001190001
(62-68)
4500000100001190002
640032
(7-53),(26-56)
4500000100001280001
61,(92-114)
4500000100001280002
4500000100001290001
(51-57),(50-70)
4500000100001290002
(63-77),(76-96)
4500000100001290003
4500000100001290004
(5-65),(2-10),(20-58)
4500000100001390001
(67-135),(60-74)
4500000100001390002
(137-187),(76-148),191
4500000100001390003
(5-9),(4-14)
4500000100001500001
(11-43),(18-50)
4500000100001500002
(11-13),17,(4-6)
4500000100001680001
(31-111),(24-80)
4500000100001680002
(117-151),(84-98),106
4500000100001680003
4500000100001700001
640014
4500000100001700002
(3-11),19
4500000100001700003
41,(49-81),(36-56)
4500000100001870001
(58-92)
4500000100001870002
4500000100001870003
(107-215),(96-174)
4500000100001870004
(1-47),2
4500000100001880001
4500000100001880002
69,71
4500000100001880003
1,9
4500000100001930001
(9-63),(10-72)
4500000100001930002
(7-9),(4-10)
4500000100001950001
(25-33),(18-24),(70-76)
4500000100001950002
(1-69),(2-52)
4500000100002090001
(71-169),(54-68),(104-136)
4500000100002090002
(5-7),(2-20)
4500000100002110001
(83-111),46,(104-112)
4500000100002110002
4500000100002140001
(29-67),(44-90)
4500000100002140002
(1-61),(173-175),(2-60),(174-176)
4500000100002230001
4500000100002230002
(5-23),(6-26)
4500000100002260001
37,63,71,36,70
4500000100002260002
(11-17),6,(12-26)
4500000100002380001
(35-71),(38-82)
4500000100002380002
9,2
4500000100002390001
4500000100002390002
4500000100002450001
(41-85),(2-60)
4500000100002450002
(91-227),(70-124),158
4500000100002450003
(249-257),182,212,214
4500000100002450004
(1-17),(12-40)
4500000100002490001
(42-58),(62-64)
4500000100002490002
4500000100002580001
(15-25),(28-42)
4500000100002580002
4500000100002580003
(31-67),(82-92)
4500000100002580004
(1-81),(2-44)
4500000100002590001
(83-103),(46-80)
4500000100002590002
(9-19),(4-52)
4500000100002630001
25,(55-203),(66-208)
4500000100002630002
(1-75),(14-90)
4500000100002710001
(79-159),(92-160)
4500000100002710002
161,179,(195-201),(166-196)
4500000100002710003
(13-49),(6-50)
4500000100002780001
(51-85),(52-116)
4500000100002780002
4500000100002890001
41,(62-68)
4500000100002890002
4500000100002920001
(49-110),(44-124)
4500000100002920002
13,4,12
4500000100003020001
(29-79),(22-88)
4500000100003020002
(151-157),(193-195),(124-170)
4500000100003020003
4500000100003190001
(47-103),(50-80)
4500000100003190002
(1-87),(6-46)
4500000100003400001
93,92
4500000100003400002
4500000200000040001
641875
4502
37405000000
(7-9),(50-999)
4500000200000040002
641883
(2-84),(1-45)
4500000200000060001
(106-158),(119-179)
4500000200000060002
4500000200000010001
641870
(32-66),(53-69),37,39
4500000200000010002
641884
(123-129),135
4500000200000100002
4500000200000190001
641881
(20-72),(17-53)
4500000200000190002
(2-20),(1-29)
4500000200000320001
(22-26),(30-46),(37-55)
4500000200000320002
4500000200000350001
(2-34),(27-69)
4500000200000350002
(10-12),(1-3)
4500000200000360001
(37-43)
4500000200000360002
641871
(2-8),(14-28),(5-35)
4500000200000360003
641876
(2-24),(1-19)
4500000200000540001
(58-162),(73-151)
4500000200000540002
4500000200000890001
(26-52)
4500000200000890002
4500000200000980001
(72-90),(73-93)
4500000200000980002
(18-70),(15-71)
4500000200000980003
4500000200001130001
(78-214),(71-189)
4500000200001130002
(216-238),(201-209)
4500000200001130003
(2-10),(16-18),(1-3),(19-21)
4500000200000680001
(12-14),(5-17)
4500000200000680002
(20-46),(23-35)
4500000200000680003
641882
4500000200001210001
(22-54),(15-57)
4500000200001210002
(2-174),(1-135)
4500000200000700001
180,(137-171)
4500000200000700002
(8-18),(1-13)
4500000200001420001
(22-52),(15-43)
4500000200001420002
(46-60),(25-41)
4500000200001560001
(2-44),(1-23)
4500000200001560002
(166-170),(179-197)
4500000200001560003
(2-68),3
4500000200001720001
(70-156),(5-999)
4500000200001720002
641878
4500000200001900001
(84-132),(79-163)
4500000200001900002
(1-85),(2-106)
4500000200002060001
(110-164),(97-169)
4500000200002060002
4500000200002030001
(30-46),(21-37)
4500000200002030002
(62-84)
4500000200002230001
(98-132),(59-75)
4500000200002230002
(136-144),(125-139)
4500000200002230003
(2-88),(1-81)
4500000200002330001
(90-152),(93-101)
4500000200002330002
(103-195)
4500000200002330003
4500000200002420001
(14-30),(19-57)
4500000200002420002
4500000200002690001
(30-82),(35-71)
4500000200002690002
4500000200002730001
(70-142),(149-217)
4500000200002730002
4500000200002960001
4500000200002960002
(4-38),(1-31)
4500000200002190001
(40-118),(33-125)
4500000200002190002
4400100100000730003
1-3,17-41
4400100100001570003
4400100100001760004
(4-12),(3-11)
4400100100001700001
(14-22),(13-21)
4400100100001700002
4400100100003850001
(16-46),(25-59)
4400100100003850002
4400100100004530001
4400100100004530002
4400100100005230001
(14-50),(23-31),(51-91)
4400100100005230002
4400100100000130001
1-4,6-17,(20-34)
4400100100000130002
(59-65),67,92
4301300100000390001
613043
4312
33407000000
4301300100000030001
613044
2/1,2/2,3,4,6/1,6/2,6/5,8,8 
4301300100000290001
1,5,7,11,13,15,19,21
4301300100000800001
(2-16),11,20,22,24,5
4301300100000350001
613045
17,19,21,15
4301300100000710001
(43-55),64,66,72,74,70
4301300100000390002
5-10
4301300100000120001
1,3,5,6,8,10
4301300100000280001
4301300100000060001
4301300100000010001
4301300100000740001
(26-32),35,29,31,33,39,41,52,58,62
4301300100000390003
613046
1-3,5,7,9,11
4301300100000710002
4301300100000120002
(3-9),8,10,13-20,22,24,26,28,51,53-57
4301300100000470001
38,39
4301300100000190001
11,13-16,18,20
4301300100000600001
30,32,34,29,16,17,19,21,31
4301300100000610001
1-8,10,12,14
4301300100000780001
5,7,14,16
4301300100000480001
(10-20),24,26,5/2,60/3,30,32,1
4301300100000290002
613047
(4-20),1,3
4301300100000670001
(7-19),23/2,23/3,3,4
4301300100000150001
53,55,57,59,61,(64-70)
4301300100000290003
613049
4301300100000200001
1,3,5,5
4301300100000090001
15,25-28,30,32,34,36,13,19
4301300100000350002
613050
(7-19),14,(24-42),12
4301300100000280002
(47-55),37,39,42,44,46,54,56,58
4301300100000260002
48,50,54,56,41
4301300100000610002
5,7,9,(22-42)
4301300100000670002
23,(25-41)
4301300100000150002
27,29,30,32
4301300100000600002
3,4,9,12,5,7
4301300100000740003
8,12,16
4301300100000060002
4301300100000010002
4,8,10,12,16,22,24,26,(30-36)
4301300100000030002
613051
25,27,29,31
4301300100000800005
(2-24),(3-13),(17-27)
4301300100000390004
613040
4,6-24,(26-34)
4301300100000200003
34-37,39-41,(42-52),49,58,60,62
4301300100000290004
5¡,7,9,10,11
4301300100000090002
4,5,6
4301300100000470008
2-11,13,15-19,21,23-28,31,33
4301300100000190002
4301300100000660001
9,11,17,18,20
4301300100000780002
4301300100000480002
4301300100000660002
3-5
5000000800000790001
142181
5021
46436000000
1,2,6-999
5000000800000790002
142184
2,5-7
5000000800000420001
1,3-4,8-999
5000000800000420002
5000000800000140001
1-8,10-999
5000000800000140002
3,10,12
5000000800000030001
1,2,4-9,11,13-999
5000000800000030002
36,40,42
5003700400000010001
(46-128)
5003700400000010002
1-30,31,32-33
5000001900000040002
5000001900000410002
(102-118),(103-119)
6901500100000790001
171256
6911
28430000000
(76-80)
6300000100001920003
(32-74)
6300000100001940007
(23-105)
6300000100001940008
6300000100002100005
(95-101)
6300000100002100006
6300000100002110004
(78-134)
6300000100002810006
6300000100007140008
(32-62),(47-93)
6300000100002690005
6300000400000150001
(2-40),(3-71)
6300000400000150002
6300000300000530001
6300000300000530002
(16-46),(21-51)
6300000300000590002
(4-16),(7-17)
6300000300000670002
(2-50),(3-11)
6300000300000560002
6300000300000570002
6,(29-51)
6300000300001190002
6300000300001320002
6300300000100130001
446254
6300300000100130002
6300300000100130003
6300000100001170002
(2-200),1,15
6300000100005260001
6300000100005260002
(50-60),(57-77)
6300000700005550005
(62-98),(79-99)
6300000700005550006
6300000700003310008
2700000100004070019
680001
8,8,10,11,11,12,13,14,15,17
2700000100003010001
680006
2700000100006630004
9,9,19,12,12,12¡,12,19
2700000100007870001
(2-8),(14-22),(19-25)
2700000100001480002
2700000100000340002
680015
2700000100004370002
680051
2700000100003020003
5500000100001280003
5500000102100000001
644098
5500000103400000001
5500000103100000001
644910
(61-999),(48-998)
5400000100003030001
(1-59),(2-46)
5400000100003030002
(91-105),124
5400000100000710002
(1-137),(8-96),98,98,(100-114)
7600000100011090001
7600000100003460001
7600000100003460002
7600000100004560004
7600000100005800003
7600000100011090002
9/1
7600000100000570001
150018
64-66
7600000100001800001
59,69,71,(68-78)
7600000100000310001
7600000100001800002
150019
(1-57),(2-64)
7600000100000310002
(39-45),(40-46)
7600000100004280001
46,47,48,49,50
7600000100005490001
7600000100010650001
(1-13),(15-25),(2-26)
7600000100003750002
7600000100004280002
2-45
7600000100005490002
7600000100010650002
(55-95),(60-74),120,130,103,105
7600000100010220001
150033
(1-29),14,(16-28)
7600000100010920001
21,(25-35),(26-66)
7600000100000670001
150042
3,7,9,13,(2-28),15
7600000100002200001
13,17,27,22,52,54,58,(29-53),(2-12),20
7600000100010220002
(1-37),(2-12),14/50
7600000100010380001
7600000100010920002
(30-38),(42-46),50
7600000100002200002
(25-37),18,(32-50)
7600000100003980002
1,18 
7600000100010220003
(41-63),(22-52)
7600000100010380002
7600000100010560001
(75-95),(52-54)
7600000100003980003
150045
(5-35),3ª6
7600000100005990001
7600000100010140001
25,(52-80)
7600000100002200003
150052
(1-5),2,6,8
7600000100010140002
(65-71),(54-68)
7600000100010380003
7600000100005990002
150061
7600000100010140003
7600000100001240001
150063
(15-29),31/53,13ª2
7600000100010140004
(8-16),6/2
7600000100005990004
150064
62,62,64,64,66ª2,(68-86),(45-47)
7600000100000670002
11,(26-38)
7600000100001670001
(42-48),(52-56)
7600000100001670003
(1-5),9,17,19,2,2 ,(6-12),(16-22)
7600000100001670004
7600000100001840001
7600000100001840002
(29-77)
7600000100001840004
(36-52)
7600000100001840005
(2-58),(1-133)
7200000100000150001
625005
7202
71401372000
(60-140),(141-361)
7200000100000150002
625022
7200000100000280001
625031
7200000100000280002
1-27,29
7200000100000320001
625002
(28-38),(35-45)
7200000100000320002
625000
(18-66),(23-79)
7200000100000330001
(2-16),(1-21),47
7200000100000330002
625003
(1-13),(4-14)
7200000100000360001
7200000100000360002
625043
7200000100000380001
59,63,87,95,101
7200000100000380002
7200000100000380003
7204
71401364000
(46-98),57,61,55,53
7200000100000380004
(1-7),(11-31),(22-60),64,66,(70-76)
7200000100000420001
(33-77),62,68,78
7200000100000420002
(6-20),9
7200000100000420003
152,162,166,196
7200000100000480001
7203
71401368000
(1-5),(13-33),(37-63),201,203
7200000100000480002
(69-173),(2-134),7,9,11,35
7200000100000480003
(1-15),(2-24),19
7200000100000600001
(36-114),79,81
7200000100000600002
7200000100000670001
7200000100000670002
40,1-38
7200000100000730001
46,48-999,45
7200000100000730002
1,2,4,6
7200000100000850001
625048
14,16,18,52,54
7200000100000850002
625026
7200000100000850003
625027
(5-17),8,10
7200000100000850004
(61-65),(56-66),55
7200000100000850005
625023
7200000100000860001
7200000100000860002
12,13,14
7200000100000910001
625039
2,3,6-9
7200000100000910002
7200000100000930001
7200000100000930002
(40-80),(43-89)
7200000100000930003
(3-83),(2-60)
7200000100000980001
(91-97),(68-74)
7200000100000980002
82,84,88,92
7200000100001040001
(4-52),(1-71),(56-58)
7200000100001040002
(110-118)
7200000100001080002
(1-79),56
7200000100001080003
(91-119),(82-108)
7200000100001080005
7200000100001080006
(81-89),(58-80)
7200000100001080007
7200000100001130001
(2-22),(1-13),32,90,96-104
7200000100001130002
(45-89),86
7200000100001130003
58,60-69
7200000100001140001
(3-59),(2-54)
7200000100001140002
1,(7-15)
7200000100001190001
625055
7200000100001190002
(26-64),(17-73)
7200000100001190003
1,3,(4-16),(22-50),(39-69),54
7200000100001240001
71,72,101,105
7200000100001240002
7200000100001350001
62,65,67
7200000100001350002
17,28,30
7200000100001410001
(3-11),(2-22)
7200000100001410002
7200000100001430001
(30-999),(23-25),26
7200000100001430002
(18-24),25-999,15,19
7200000100001440001
(2-16),(1-15),17,(21-23)
7200000100001440002
(2-38),(1-43)
7200000100001560001
(40-54),(51-71)
7200000100001560002
97,99,103,105-114,119-123,(148-156),157
7200000100001560003
142-147,158-161
7200000100001560004
(11-17),1,2,4,5,7
7200000100001580001
(30-60),20,(27-65)
7200000100001580002
(62-92),(77-103)
7200000100001580003
143-147,(149-161),(148-158)
7200000100001660001
7200000100001660002
(137-141)
7200000100001660003
(163-175)
7200000100001660004
(179-189)
7200000100001660005
625013
(207-223),(206-220),232,234
7200000100001660006
625019
(229-253),(246-258),255,262
7200000100001660007
625014
(29-61),(34-64),78
7200000100001660008
(73-135),(86-94)
7200000100001660009
(160-204),205
7200000100001660010
625035
41,43,57
7200000100001720001
(1-7),(23-29),2,(12-22),35
7200000100001720002
7200000100001730001
(17-35),(26-36),11
7200000100001730002
(49-55),(50-60)
7200000100001730003
1-24,26-29
7200000100001750001
25,30-999
7200000100001750002
1-13,15
7200000100001810001
(19-95),(20-126)
7200000100001810002
1-64
7200000100001950001
70-74
7200000100001950002
7200000100002030001
13,16,17,19,21
7200000100002030002
1,5,7,9,20,(2-18)
7200000100002130001
(19-35),32,38,40,44,48
7200000100002130002
(69-77),(81-87),72
7200000100002140001
(2-50),(1-63),67
7200000100002140002
(52-60)
7200000100002140003
1-16,18
7200000100002170001
(17-97),(20-88)
7200000100002170002
1-40,42,50
7200000100002220001
41,43-49,51-999
7200000100002220002
(1-79),(4-56)
7200000100002310001
(103-207)
7200000100002310002
(95-101),76,78,80,150,158,160,9
7200000100002310003
(84-124)
7200000100002310004
7200000100002340001
7200000100002340002
16-20,21
7200000100002340003
163-165,94-100
7200000100002340004
2,6
7200000100002340005
28-30,35,41,43
7200000100002340006
31-34,36,38,39,(45-55)
7200000100002340007
7200000100002340008
42-44,(50-64)
7200000100002340009
7200000100002410001
60-62,66,68
7200000100002410002
62,63-65,69-180
7200000100002410004
32,34-59
7200000100002410005
7200000100002430001
43-49,67-69,73-77,71,71
7200000100002430002
79-83,89-107,57
7200000100002430003
115,115,132,134,138-142
7200000100002450001
625046
146,114,144,36
7200000100002450002
40-62
7200000100002450003
625016
14,14/1,38
7200000100002450004
625007
7,15,22,71,(72-126),(73-109)
7200000100002450005
625051
7200000100002480001
7200000100002480002
3,5,21-33,11,12,8
7200000100002530001
37,2
7200000100002530002
7200000100002550001
(17-29),33,35,39,43,45,47,55,(16-54)
7200000100002550002
50,61,65,52,56-60,64,(68-80)
7200000100002680001
7200000100002680002
26,30
7200000100002690001
7
7200000100002690002
625008
1,(2-18),(11-19)
7200000100002780001
7200000100002780002
7200000100002810001
7200000100002810002
1,5,7,8,(14-26),27
7200000100002830001
40,44,38
7200000100002830002
52
7200000100002830003
60,(33-63),(46-54),40
7200000100002830004
4,(9-51),102
7200000100002840001
(8-44),54,84,6,6
7200000100002840002
17,(18-22),(26-38)
7200000100002860001
7200000100002860002
623023
3,7,(2-26),5
7200000100002870001
34,40,42,42
7200000100002870002
7200000100002870003
(44-70),74
7200000100002870004
7200000100002910001
(51-55),58,(62-66),(70-78)
7200000100002910002
(63-67),73,80,82,84
7200000100002910003
(3-7),(2-6)
7200000100003040001
(8-12),11,42,59,64,66,77 
7200000100003040002
11-25,27,29
7200000100003080001
33-63
7200000100003080002
65-83,104,92,96,100,91
7200000100003080003
(119-123),129,(148-156),157,146,159
7200000100003080004
7200000100003130001
625030
(29-81),(28-72),76
7200000100003130002
625049
7200000100003140001
55,57-77,83
7200000100003140002
33-78
7200000100003160001
(15-31),(2-30)
7200000100003160002
625032
7200000100003190001
7200000100003190002
7200000100003210001
7200000100003210002
1-76,(78-106)
7200000100003220001
625025
(129-167),(148-164)
7200000100003220002
(77-123),(108-144)
7200000100003220003
1-81,(83-91)
7200000100003250001
(93-227),(84-200)
7200000100003250002
625062
15,(29-49),75,77,(2-74)
7200000100003310001
(81-179),(76-204)
7200000100003310002
(62-112),(61-109),(117-133)
7200000100003370001
1,7,25,27,29,30,32-48,50,52
7200000100003370002
54,55
7200000100003370003
7200000100003430001
33-79
7200000100003430002
7200000100003490001
(39-121),(28-80)
7200000100003490002
7200000100003620001
(13-147),(26-154)
7200000100003620002
91,(119-129),106,114,95
7200000100003640001
(1-87),(2-78)
7200000100003640002
7200000100003790001
(62-72)
7200000100003790002
7200000100003810001
(81-159),(4-82),(92-150)
7200000100003810002
7200000100003860001
(31-129),(34-110),152
7200000100003860002
39-59,14
7200000100003870001
7-37,2
7200000100003870002
625037
7200000100003900001
(47-175),(104-146)
7200000100003900002
7200000100003900003
(50-102)
7200000100003900004
7200000100003910001
(29-79)
7200000100003910002
87,89,1-85
7200000100003980001
(99-109),(86-216)
7200000100003980002
(15-35),39
7200000100004080001
7200000100004080002
7200000100004100001
7200000100004100002
7200000100004120001
(25-137),(30-106)
7200000100004120002
7200000100004140001
7200000100004140002
7200000100004170001
(19-55),(20-88)
7200000100004170002
7200000100004170003
7200000100004180001
7200000100004180002
(31-113),(30-164)
7200000100004180003
7200000100004240001
(25-139),(24-116)
7200000100004240002
7200000100004250001
(87-97),100-139
7200000100004250002
4,(7-11),(10-32)
7200000100004290001
(79-149),(92-188)
7200000100004290002
2,4,6,8,10,12,14,16,18,70,19-64,69
7200000100004330001
625017
1,5,7,9,11
7200000100004330002
625054
7200000100004330003
625041
7200000100004340001
(35-105),(12-80)
7200000100004340002
7200000100004370001
7200000100004370002
(17-79)
7200000100004370003
(14-50)
7200000100004370004
7200000100004380001
(3-33),(4-62)
7200000100004380002
(35-81),(64-90)
7200000100004380003
7200000100004390001
27-74
7200000100004390002
2,(11-33)
7200000100004460001
(22-32),(35-67)
7200000100004460002
(17-99),(20-58)
7200000100004490001
(60-116),(101-137)
7200000100004490002
61,63,(1-59)
7200000100004590001
81-90,97,99,92
7200000100004590002
(2-30),(25-55),(19-23)
7200000100004610001
(32-86),(65-91)
7200000100004610002
1,(50-54)
7200000100004630001
(58-86),(111-115)
7200000100004630002
(90-138),(91-109),(117-133)
7200000100004630003
84,(86-234)
7200000100004800001
85,(1-83),(2-82)
7200000100004800002
7200000100004830001
(85-235),(92-230)
7200000100004830002
34,19,19,19,20,(57-199),198
7200000100004930001
(1-55),12,22,28,40
7200000100004930002
(1-25),(2-26),28
7200000100005010001
(37-45),(48-56)
7200000100005010002
(1-93),(2-88)
7200000100005020001
(90-198),(99-207)
7200000100005020002
7200000100005030001
(99-113),135
7200000100005030002
15,17,(8-26)
7200000100005040001
(33-78),(34-88),101
7200000100005040002
(1-13),2,4,19
7200000100005040003
1,(4-16)
7200000100005060001
(3-65),(20-76)
7200000100005060002
(69-93),(78-126)
7200000100005060003
7200000100005110001
(60-86),(63-87)
7200000100005110002
(89-141),(88-130)
7200000100005110003
7200000100005150001
(56-230),(87-231)
7200000100005150002
7200000100005160001
(1-67),(2-76)
7200000100005160002
(69-119),(84-128)
7200000100005160003
7200000100005200001
7200000100005200002
7200000100005320001
7200000100005330001
19-29,42
7200000100005330002
60-88,92,94
7200000100005330003
7200000100005440001
17-34
7200000100005440002
105
7200000100005470001
(1-77),(2-124),138-140,125
7200000100005470002
625001
7200000100005470003
7200000100001890001
7,25
7200000100002450006
7200000100002450007
27,31
7200000100002450008
(1-71),(2-80)
7201100100000860001
104,106
5200000100004440003
5200000400000190001
1-73,(75-83),85-999
5200000400000190002
82-84,85-999
5200000400000010001
5200000400000010002
(2-80),(1-81)
5200000400000010003
5200000400000120001
5200000400000120002
5200000400000140003
607222
(22-76)
5200000400000430001
1-21,(23-75),77-999
5200000400000430002
5200000400000550001
13/1,14-999
5200000400000550002
14/1,16,18/1,(20-28),30/1,30/2,(32-98)
5200000400000600001
607232
(2-14),18,30,(1-999)
5200000400000600002
607221
47,49,51,53
5200000400000640003
5200000400000690001
5200000400000690002
5200000400000700001
33,35-999
5200000400000700002
1,2,2,3
5200000400000800001
5200000400000800002
(65-67),74,76,72/1,78/1,78/2,78/3
5200000400001100001
1-64,66,68-999
5200000400001100002
5200000400001340001
5200000400001340002
(38-46),(37-41)
5200000400001450003
5200000400001610001
(3-999),(22-998)
5200000400001610002
(2-36),(1-11)
5200000400001690001
(38-998),(13-999)
5200000400001690002
5200000400001710001
5200000400001710002
7600000100001280001
29/2,(47-69),2,2 ,4
7600000100001280002
48,63,36
7600000100001330005
3-9
7600000100003070001
7600000100003420001
7600000100003420002
(31-41),(32-52)
7600000100005140004
(31-63),(28-80)
7600000100000370001
(65-75),(84-122)
7600000100000370002
(79-87),(124-130),67 
7600000100000370003
39/46,46
7600000100006410007
7,9,25,27,(41-45),(28-44),24
7600000100007820001
(49-61),46,54
7600000100007820002
2700000100001710003
2700000100001710004
6300000100004170001
(1-55),63,65
6300000100004170002
6300000100012700001
443072
22-32
6300000100012700002
6300000100009100010
4,5,6,12
6300000100010220001
2,2,8
6300000100010220002
6300000100008620001
6300000100008620002
(4-16),(1-13)
6300000100006160001
15,17,20,22
6300000100006160002
6300000100012330001
6300000100012330002
6300000100000670013
23,25,50,52
6300000100001530009
6300000100012460001
(8-20),(7-19)
6300000100012460002
6300000100008900001
67/135,61,69,71
6300000100008900002
20-47
6300000100001570001
6300000100001570002
4,6,
1600000200000060008
1600000100000070001
1600000100001270004
420051
(38-88)
1600000100001750003
2/5,4/2
1600000100020840003
1600000100002870001
1600000100002870002
25,(24-42)
1600000100002870003
,(1-43),(53-999)
1600000100003000002
1600000100004250003
(13-999),(14-38),(42-998)
1600000100005010003
99,107,111
1600000100006340002
1600000100006450002
1600000100006700003
420014
77,83,136
1600000100007790001
420005
1-76,78-82,84-135,137-999
1600000100007790002
69,69/1,69/2,71
1600000100008720004
(71-999),(54-62),(68-998)
1600000100015880005
1,2,5,35,(8-14),(43-999)
1600000100009160001
1600000100009160002
1,2,29
1600000100009700001
420053
1600000100009700002
420056
1600000100010200001
1600000100010200002
21-27
1600000100010300001
52,54
1600000100010300002
1,3,(45-999)
1600000100011300002
(5-43),
1600000100011300001
(120-998),57,153/33
1600000100011950004
420100
(15-21),(18-44)
1600000100011950005
(29-71),(46-72)
1600000100011950006
(90-112),101
1600000100016500006
(85-87),(89-999)
1600000100005000006
1600000100013100003
1600000100013890003
1600000100006540003
(94-999),(113-999)
1600000100015330004
(111-135),(114-132)
1600000100015600005
1600000100044410001
59,61
1600000100044410002
1,2,6,7,9,11,12,13,14,32
1600000100016630001
(15-997),(34-998)
1600000100016630002
1604300100000450001
37/23
5200000200000330004
5200000200000800003
5202800100002010001
5202800100002010002
90-118
5202800100000310003
5200000300000130002
5200000300000250001
5200000300000250002
(72-76),58,62
5200000300000450001
5200000300000450002
5200000300000490001
(30-108),(21-103)
5200000300000490002
607181
5400000100000080001
(1-999),(2-28),(32-998)
5400000100000080002
(1-25),(27-999),(2-998)
5400000100000810001
25/2
5400000100000810002
43,45
5400000100011930003
(222-998)
5400000100013250003
(1-219),(2-200),(204-220)
5400000100014100001
(79-999),(2-26),(46-998)
5400000200001020001
(1-77),(28-44)
5400000200001020002
5400000600000770001
632386
5400000600000770002
5400000600000980001
(13-999),(28-998)
5400000600000980002
5402400100000580001
633454
5438
50252501000
(1-999),(8-998)
5402400100000580002
633453
5402800100000640001
(1-147),(2-162)
5402800100000850001
(149-999),(164-998)
5402800100000850002
(52-54)
7800000000007280012
7800000000004100003
4600700100000170001
307173
4633
38405000000
21-23,6
4600700100000170002
307177
2-20
4600700100000180001
24-36
4600700100000180002
4600700100000210001
307178
13,15,19,23
4600700100000210002
307176
4600700100000210003
307179
37-47,80-86
4600700100000400002
4600700100000400003
307171
1-16,
4600700100000430001
(18-52),(17-37)
4600700100000430004
307170
4600700100000480002
49-65
4600700100000480003
4600700100000530001
26-57
4600700100000530002
4600700100000750001
46-169
4600700100000750002
3800001500000180001
666033
3848
25450000000
16-39,13
3800001500000180002
666032
3800001500000290001
(2-41)
3800001500000290002
2-54,56
3800001500000350001
3800001500000630001
31-87
3800001500000630002
(1-19),26-44
3800001500000660001
3800001500000660002
55,57-94
3800001500000350002
(48-144),(103-209)
5500000100001210005
(8-52),(56-76),(1-59)
5500000100005670007
(24-102),(3-61)
5500000100006420003
(2-46),1
5500000100006650005
5500000100006860001
5500000100006860002
5500000100001020001
5500000100001020002
(2-76),(1-43)
5500000100001150001
(78-999),(45-999)
5500000100001150002
5500000100002610001
22-134
5500000100002610002
(51-91)
5500000100006140001
(44-96),(105-125)
5500000100006330007
5500000100007400001
(14-999),(23-999)
5500000100007400002
(2-38),(70-76),(1-39),73
5500000100012310001
5500000100014390005
5500000100001240001
5500000100001240002
(2-48),(1-23),35,37
5500000100002440001
(60-78)
5500000100006640005
(50-110),(33-999)
3200000100000130004
3200000100000130005
3200000100011030001
3200000100011030002
(91-101),(142-174)
3200000100000780002
(1-23),(57-63),(2-14)
3200000100000780003
3200000100001070001
241047
3233
15401370000
46-78
3200000100001070002
241022
(66-148),(27-85)
3200000100001790001
3200000100001790002
(2-8),(1-33)
3200000100002620003
(35-121),(30-98)
3200000100002730001
(2-14),(1-33)
3200000100002730002
(114-272),(125-359)
3200000100002730003
(18-30),(25-41)
3200000100003250003
3200000100003780001
24ª,31ª
3200000100003780002
(2-44),(1-75)
3200000100004310002
(26-34),15
3200000100004600001
(38-74),(17-99)
3200000100004600002
3200000100005320003
(16-998),(33-999)
3200000100005440001
(2-14),(1-31)
3200000100005440002
3200000100006330001
(18-998),(7-999)
3200000100006330002
(2-40),(1-31)
3200000100007010001
(42-60),(33-37)
3200000100007010002
(2-96),(1-51)
3200000100007230001
(98-998),(53-999)
3200000100007230002
3200000100007440001
(12-76),90
3200000100007440002
3200000100007520001
3200000100007520002
3200000100008880001
3200000100008880002
3200000100008570003
3200000100008710001
241037
3200000100008710002
(28-102),(39-49),(65-77),(81-83)
3200000100008710003
(51-63),79,106
3200000100008710004
(106-998),(97-999)
3200000100009620003
(122-998),(129-999)
3200000100010200003
(32-120),(21-127)
3200000100010200004
(2-16),(1-23)
3200000100003250005
(80-92),(3-13)
3200000100004600004
3200000100010990001
(2-28),(1-27),(33-43)
3200000100010990002
3300900100000020001
601786
3326
3306
17430000000
3300900100000020002
601785
3300900100000170001
601784
3300900100000170002
601782
15/17,(17-29),48-112
3300900100000250001
1-14,(16-46)
3300900100000250002
(18-32),31
3300900100000260001
1-17,(19-29),33-999
3300900100000260002
3300900100000270001
3300900100000270002
1-33,41,45
3300900100000460001
34-40,42-44,46-999
3300900100000460002
3300900100000700001
3300900100000700002
3300900100000800001
3300900100000800002
2-118,120,122,124,126
3300900100000810001
119,121,123,125,127-241
3300900100000810002
56-58,60-62,66
3300900100000850001
1-55,59,63,64,65
3300900100000850002
27-91
3300900100000920001
3-25
3300900100000920002
3300800100000340001
(1-87),(2-92)
3300800100000340002
3300800100000490001
7/3
3300800100000490002
(7-125),(8-76)
3300800100000490003
3300800100000700001
3300800100000700002
3300800100000850008
3300800100001030001
(27-31),(28-32)
3300800100001030002
3300800100001070002
97,99,101
3300800100001070003
(21-55),(46-54)
3300800100001200003
3300800100001550001
(17-55),
3300800100001550002
(3-13),(2-14)
3300800100001670001
(15-93),(16-80)
3300800100001670002
3300800100001920001
(29-49),(30-50)
3300800100001920002
3300800100002020001
(61-95),(54-78)
3300800100002020002
(1-27),(2-34),(64-82)
3300800100002310001
(29-45),(36-62)
3300800100002310002
(15-25),(4-32)
3300800100002350001
(63-111),(34-56)
3300800100002350002
3300800100002350003
(3-5),(4-26),9,13,15,33,35
3300800100002470001
3300800100002470002
3300800100002750003
3300800100001280004
(61-63),(76-78)
3300800100001320003
1602600100000100001
423254
1689
1649
92425000000
(16-54),(25-73)
1602600100000100002
423255
16,25,27,33,36,42,44,46,48,50
1602600100000210001
423250
3-6,8-11,13,17,19,23
1602600100000210002
423251
1-16,44,(31-127),112,114
1602600100000440001
(17-25),(18-110),112
1602600100000440002
(1-63),(2-18),(71-75)
1602600100000460001
(24-66),(77-105)
1602600100000460002
39,41,46,48,55,57,63
1602600100000530001
423258
6,7,(10-20),11,15,23,25,30,32,(33-37)
1602600100000530002
423259
1602600100000590001
24,26,30,32,36,38,39,(44-48)
1602600100000590002
423252
6,7,10,15,16,20,22,(33-37)
1602600100000590003
1602600100000600001
(13-25),12,16,18,22,26,22
1602600100000600002
10,(19-33)
1602600100000620001
14,35,37,48,56
1602600100000620002
61,71,73,75,77
1602600100000620003
(83-87),91,93
1602600100000620004
(22-38),39,(43-47),49,(51-55)
1602600100000620005
17-20,24,30,31,36
1602600100000630001
(37-45),(42-50)
1602600100000630002
(1-159),(20-168)
1602600100000780001
1602600100000780002
1602600100000980001
28-74
1602600100000980002
67-70,76,78,88,90,98,(100-108)
1602600100001040001
1602600100001040002
(24-38),23,25,37,42,44,(48-60),51
1602600100001040003
1602600100001060001
(27-155),(28-146)
1602600100001060002
1,3,(7-11),(17-19),(2-66)
1602600100001160001
1602600100001160002
1602600100001310001
(8-14),21,30 ,30
1602600100001310002
1,2,4-7,9-13,15,(30-46),23,25,25 
1602600100001350001
(31-53),(90-94),82,63
1602600100001350002
(48-76)
1602600100001350003
1600000100005020008
(20-24)
1600000100005020009
1600000100006940003
(2-58),(1-3)
5600000100003130002
460027
5600000100000020001
(42-72),(43-71)
5600000100010180004
(2-228),(1-235)
2200000900002890001
(230-272),(237-277)
2200000900002890002
(86-998),(87-999)
2200000100002180006
(37-55),(70-132),(81-97)
2200000100001010003
246
2200000100004690013
(61-151),98
2200000100001070005
(100-126)
2200000100001070006
(1-315),(2-110),(114-316)
2200000100001970001
112,112
2200000100001970002
(52-58),35,50,35/1
2200000100006270001
(7-81)
2200000100000770005
16,22,24,28
2200000100004810004
2200000100005470001
(7-31),(10-36)
2200000100005470002
(88-112)
2200000100005660009
2202700100000040001
658421
2256
01225501000
2202700100000040002
(23-79)
2202700100000040003
658423
(30-92)
2202700100000040004
2202700100000060001
2202700100000060002
(15-21),18
2202700100000060003
2202700100000070001
2202700100000070002
(61-125)
2202700100000070003
658420
(74-108)
2202700100000070004
2202700100000100001
2202700100000100002
2202700100000100003
658422
(3-55)
2202700100000160001
2202700100000160002
(57-107)
2202700100000160003
(54-92)
2202700100000160004
2202700100000230001
2202700100000230002
2202700100000250001
2202700100000250002
2202700100000250003
(52-80)
2202700100000250004
2202700100000270001
2202700100000270002
(21-23),22
2202700100000270004
2202700100000300001
2202700100000300002
2202700100000300003
128
2202700100000310001
2202700100000310002
2202700100000310003
(39-121)
2202700100000310004
20,20,(22-72)
2202700100000310005
2202700100000340001
2202700100000340002
2202700100000340003
(130-138)
2202700100000340004
2202700100000360001
2202700100000360002
(101-109)
2202700100000360003
(126-136)
2202700100000360004
(97-99)
2202700100000360005
114,(116-124)
2202700100000360006
44-66
2202700100000380001
658424
2202700100000390001
2202700100000390003
2202700100000390004
2202700100000430001
2202700100000430002
(69-85)
2202700100000430003
(60-76),80
2202700100000430004
2202700100000460001
2202700100000460002
2202700100000460003
2202700100000460004
2202700100000470001
2202700100000470002
2202700100000470003
2202700100000470004
2202700100000470005
2202700100000480001
2202700100000480002
(117-123),122
2202700100000480003
2202700100000520001
(2-18),22
2202700100000520002
(21-33)
2202700100000520003
20,22,(38-76)
2202700100000520004
2202700100000530001
2202700100000530002
(23-51)
2202700100000530003
(28-84)
2202700100000530004
2202700100000540001
2202700100000540002
35,(26-28)
2202700100000540003
2202700100000600001
2202700100000600002
2202700100000600003
2202700100000600004
2202700100000720001
2202700100000720002
(29-97)
2202700100000720003
(32-92)
2202700100000720004
(187-195)
2200000100004690014
(131-999)
2200000100000430005
2200000100005840004
2302100000800180001
352542
2314
03230816001
2302100000800180002
352540
2302100000800180004
2302100000800200001
(9-49)
2302100000800200002
2302100000800200003
2302100000800260001
2302100000800260003
(45-187)
2302100000800260004
(68-208)
2302100000800260005
2302100000800380001
(5-33)
2302100000800380002
(6-64)
2302100000800380004
2302100000800390002
2302100000800390003
2302100000800390004
2302100000800390005
2302100000800440001
2302100000800440002
(87-205)
2302100000800440003
(126-198)
2302100000800440004
2302100000800450001
2302100000800450002
(47-65)
2302100000800450003
(62-78)
2302100000800450004
2302100000800480002
2302100000800480003
(127-141)
2302100000800480004
(122-126)
2302100000800480005
2302100100000010001
352500
03417000000
(2-254)
2302100100000010002
(311-371)
2302100100000010003
352503
(328-402)
2302100100000010004
(249-309)
2302100100000010005
352507
(256-326)
2302100100000010006
(297-403)
2302100100000020001
352508
(286-402)
2302100100000020002
(405-507)
2302100100000020003
(404-502)
2302100100000020004
(509-523)
2302100100000020005
(504-578)
2302100100000020006
(1-295)
2302100100000020007
(2-284)
2302100100000020008
2302100100000030001
2302100100000030002
(265-345)
2302100100000030003
(278-334)
2302100100000030004
(119-263)
2302100100000030005
(148-276)
2302100100000030006
(215-307)
2302100100000040001
(162-234),356
2302100100000040002
1,(115-213)
2302100100000040004
(106-160)
2302100100000040005
2302100100000060001
(74-100)
2302100100000060002
2302100100000060003
2302100100000060004
(77-121)
2302100100000120001
352501
116
2302100100000120002
2302100100000120003
352506
2302100100000120004
(209-381)
2302100100000130001
(188-350)
2302100100000130002
(127-207)
2302100100000130003
(116-186)
2302100100000130004
2302100100000130005
2302100100000130006
(149-169)
2302100100000140001
(202-228)
2302100100000140002
(81-147)
2302100100000140003
(94-164)
2302100100000140004
2302100100000140005
352502
(166-200)
2302100100000140006
2302100100000140007
2302100100000140008
(179-261)
2302100100000150001
(156-224)
2302100100000150002
(139-177)
2302100100000150003
(96-154)
2302100100000150004
(1-137)
2302100100000150005
(77-99)
2302100100000270001
2302100100000270002
2302100100000270003
2302100100000270004
(1-63),(69-75)
2302100100000270006
2302100100000270008
(125-251)
2302100100000290001
(120-190)
2302100100000290002
(37-123)
2302100100000290003
(42-118)
2302100100000290004
2302100100000290005
2302100100000290006
2302100100000320001
2302100100000320003
352504
2302100100000320004
(81-223)
2302100100000460001
(82-234)
2302100100000460002
2302100100000460003
(101-259)
2302100100000470001
(256-276)
2302100100000470002
(314-566)
2302100100000470003
(568-596)
2302100100000470004
2302100100000470007
352505
2302100100000470008
(30-226)
2302100100000470009
2302100100000470010
(236-254)
2302100100000470011
(278-312)
2302100100000470012
(65-79)
2302100100000470013
(228-234)
2302100100000470014
2302100100000500001
2302100100000500002
2302100100000510001
2302100100000510002
(37-277)
2302100100000510003
(34-268)
2302100100000510004
2302100100000550001
2302100100000550002
30,30/1
2302100100000550003
2302100100000550004
2302100100000550005
2302100100000550006
2302100100000640001
2302100100000640002
2302100100000640003
(45-147)
2302100100000700001
(46-154)
2302100100000700002
2302100100000700003
2302100100000700004
(15-53)
2302100100000750001
(16-96)
2302100100000750002
2302100100000750003
2302100100000750004
(92-94)
2302100100000850001
2302100100000850002
2302100100000850003
2302100100000880001
2302100100000880002
2302100100000880003
2302100100000880004
2302100100000920001
2302100100000920002
(13-123)
2302100100000920003
14,(18-80),(90-126)
2302100100000920004
2302100100000980001
(142-180)
2302100100000980002
140
2302100100000980003
2302100100000990001
(2-12),(24-46),(76-86)
2302100100000990002
(39-115)
2302100100000990003
(14-22),(48-74)
2302100100000990004
(117-127)
2302100100000990005
(53-229)
2302100100001030001
(54-220)
2302100100001030002
2302100100001030003
2302100100001030004
(37-51)
2302100100001030005
2302100100001030006
(81-145)
2302100100001290001
(86-110)
2302100100001290002
(122-144)
2302100100001290003
116,116/1
2302100100001290004
2302100100001290005
2302100100001290006
2302100100001290007
(22-84)
2302100100001290008
2302100100001300001
(2-48),(52-60)
2302100100001300002
2302100100001300003
2302100100001370001
2302100100001370002
2302100100001370003
2302100100001370004
(9-39)
2302100100001520001
(14-56)
2302100100001520002
2302100100001520003
2302100100001520004
2302100100001980001
2302100100001980002
(22-54)
2302100100002140001
2302100100002140002
2302100100002140003
(69-91)
2302100100002580001
(64-110)
2302100100002580002
2302100100002580003
2302100100002580004
(59-83)
2302100100002600001
(64-88)
2302100100002600002
2302100100002600003
2302100100002600004
(16-998),(1-999)
4200000900011550001
4200000900011550002
4200000900000050002
(4-8),(3-13)
4200000900000380002
(80-144),(101-139)
4200000900008270004
4200000900008720005
(16-76),(27-73)
4200000900008100004
7000000100000200004
7000000100001730002
7000000100002410003
(1-7),75,2,16
7000000100003480004
7000000100004100002
46,(45-59),37
7000000100004140002
15,16,18,103,108
7000000100004320002
7000000100005500001
7000000100005500002
(23-43),(26-36)
7000000100005750002
17/1
7000000100007760003
7000000100007840003
634058
7000000100008030002
(29-53),(30-66)
7000000100008160002
1,2,19
7000000100008450001
(3-15),(8-24)
7000000100008450002
(39-81)
5400000100001840007
(37-999),(22-998)
5400000100008750007
(46-998)
5400000100006260004
5400000100011160005
5400000100011160006
5400000100012740008
5400000100002170003
3602800100001650003
(41-101),(42-96)
3602800100001650004
(1-113),(2-198)
3602800100002080002
2302100100003870001
(91-103)
2302100100003870002
2302100100003870003
2302100100003870004
2302100100003870005
(40-80)
2302100100003870006
1,5,7,9,11,13,34,102
6903100000100750001
171170
28252551000
2-4,6,8,10,12,14-33,35-101,103
6903100000100750002
171171
15,19-999
6903100000100230001
6903100000100230002
1,2,2,2
6903100000101050001
2,3-7
6903100000101050002
(13-45),(16-44)
6900000100004190003
6000000100003770001
18,19
6000000100003770002
6000000100001160001
30-31
6000000100001160002
6000000100004820001
3,5,6,10
6000000100002210001
6000000100004820002
36,36,38
2300000300000620001
353465
2304
03408000000
(1-22)
2300000300000010001
(43-49),58,60,(62-66),(51-63)
2300000300000050001
2300000300000050002
2300000300000050003
(93-99)
2300000300000050004
(112-118)
2300000300000050005
2300000300000050006
2300000300000050007
(71-97),101
2300000300000060001
99,(100-112)
2300000300000060002
9-54
2300000300000080001
2300000300000110001
(40-44),(46-50)
2300000300000110002
2300000300000660001
(20-24),(38-62)
2300000300000660002
2300000300000660003
2300000300000670001
(102-114)
2300000300000670002
2300000300000670003
2300000300000680001
2300000300000680002
(37-71)
2300000300000010002
(2-10),(32-38)
2300000300000010003
2300000300000010004
353460
2300000300000010005
2300000300000650002
(103-117)
2300000300000650003
(137-151)
2300000300000650001
(92-102)
2300000300000650004
(122-146)
2300000300000650005
(104-120)
2300000300000650006
2300000300000650007
(119-135)
2300000300000650008
163,181,185,156
2300000300000650009
(13-15),(25-39)
2300000300000110003
(52-62)
2300000300000110004
2300000300000620002
353475
2300000300000050008
2300000300000050009
(1-41),(2-54)
2300000300000060003
2300000300000650010
(45-185),(50-186)
2300000300000690001
2300000300000670004
2300000300000110005
2300000300000110006
2300000300000840001
353461
2300000300000840002
2300000300000840003
2300000300000840004
2300000300000850001
2300000300000850002
2300000300000850003
(34-38)
2300000300000850004
2300000300000960001
2300000300000960002
13-68
2300000300000960003
2300000300001240001
2300000300001240002
6,30
2300000300001240003
7200000100003370004
28-32,40-43,47,48
3800000400000040001
665831
26-36
3800000400100320001
2-10,12,14
3800000400100080001
57,59,6
3800000400001420001
3800000400001480001
(1-15),19
3800000400001480002
(9-35),(30-46),(41-57)
3800000400001420002
3800000400100320002
3800000400100080002
7800000000000230001
7800000000000230002
7800000000013590006
7800000000009470015
(1-25),(2-52)
5900000100008910002
(2-66),(3-119)
5900000900000600001
617470
5917
57422000000
5900000900000600002
617472
(68-232),(123-277)
5900000900000600003
617475
5900000900001990001
5900000900001990002
5900000900000670001
617471
(14-84),(11-89),12,12
5900000900000670002
(2-96),(1-79)
5900000900000460001
(98-146),(81-171)
5900000900000460002
(2-152),(1-69)
5900000900000710001
(158-286),(71-153)
5900000900000710002
(4-42),(1-47)
5900000900000430001
(44-50),(51-113)
5900000900000430002
5900000900000430003
617480
(4-6),(3-11)
5900000900002300001
(22-30),(39-45),20
5900000900002300002
(12-20),(29-37),27
5900000900002300003
5900000900000060001
(16-42),(15-31)
5900000900000060002
(2-68),(1-31)
5900000900002060001
(70-144),(35-127)
5900000900002060002
(48-74),(87-119)
5900000900000440001
(2-34),(1-85)
5900000900000440002
5900000900002330001
(17-59)
5900000900002330002
(2-108),(3-95)
5900000900000930001
(124-148),(103-125)
5900000900000930002
5900000900000940001
5900000900000940002
(12-86),(5-91)
5900000900000940003
5900000900000470001
(26-46),(62-80),(37-55),(75-95)
5900000900000470002
(48-56),(57-71)
5900000900000470003
(2-26),(3-35)
5900000900001930001
(40-68),(37-83)
5900000900001930002
(14-78),(19-65)
5900000900002110001
(13-15),6
5900000900002110002
1,8
5900000900002110003
(22-70),(5-43)
5900000900001130001
5900000900001130002
(2-68),(1-55)
5900000900001120001
(70-74),(57-71)
5900000900001120002
(2-68),(1-85)
5900000900001310001
(70-102),(87-123)
5900000900001310002
(2-114),(3-141)
5900000900001890001
(116-144),(143-167)
5900000900001890002
(4-72),(7-37)
5900000900000120001
5900000900000120002
(76-122),(39-77)
5900000900000120003
5900000900000130001
(12-34),(13-49)
5900000900000130002
(2-148),(1-181)
5900000900001340001
(160-176),(183-193)
5900000900001340002
(2-36),(1-9)
5900000900002310001
(38-70),(11-21),(88-104),(27-57)
5900000900002310002
(72-86),(23-25)
5900000900002310004
(2-142),(1-135)
5900000900000140001
(144-160),(147-177)
5900000900000140002
(5-52),(1-45)
5900000900000330001
(75-77)
5900000900000330002
(54-74),(96-114),(47-53)
5900000900000330003
(76-92),(57-73)
5900000900000330004
(42-158),(5-37)
5900000900000410001
(224-226),(85-87)
5900000900000410002
(162-222),(39-83)
5900000900000410003
5900000900000410004
5900000900001570001
(2-10),(29-41)
5900000900001570002
5900000900000450001
(78-96),(67-83)
5900000900000450002
(28-76),(35-65),67
5900000900000450003
(2-6),13
5900000900002270001
(8-112),(5-11),(15-109),6
5900000900002270002
(146-152),(147-153)
5900001100000010001
(2-112)
5900001100000010002
(10-20),(11-21)
5900001100000130001
(146-150),(147-149)
5900001100000130002
(2-84),(1-85)
5900001100000250001
(116-154),(157-177),229,221
5900001100000250002
(180-210),(181-191),224
5900001100000250003
618542
(40-130),(39-113)
5900001100000380001
618547
(4-16),(20-36),(3-35)
5900001100000380002
618548
(14-18),(13-17)
5900001100000450001
618544
5900001100000450002
618541
(12-32),(11-31)
5900001100000500001
(33-35)
5900001100000500002
618553
(4-40),(3-45)
5900001100000520001
(42-54),(47-59)
5900001100000520002
(94-124),(3-85),113,121
5900001100000530001
(6-52),78,70
5900001100000530002
(132-160),93,95,191,170
5900001100000530003
618545
5900001100000590001
(58-64),(57-101)
5900001100000590002
5900001100000690001
5900001100000690002
(2-20),(3-21)
5900001100000770001
(28-58),(27-67)
5900001100000770002
(84-144),(91-151)
5900001100000770003
618556
(2-6),9
5900001100000960001
(134-170),(185-197),(127-169),177,179
5900001100000960002
(172-178)
5900001100000960003
(44-162),(41-167)
5900001100001060001
5900001100001060002
(2-112),(15-101)
5900001100001130001
(18-118),(19-101)
5900001100001190002
(2-92),(96-102),(3-103)
5900001100001450001
(107-111),94
5900001100001450002
(42-68),(41-69)
5900001100001810001
5900001100001810002
(10-74),(13-91)
5900001100002010001
(106-136),(93-141)
5900001100002010002
(160-212),(167-247)
5900001100002010003
5900001100002060001
(7-27),(4-22)
5900001100002060002
(2-36),84,86,(71-83),25
5900001100002200001
(146-170),(97-111)
5900001100002200002
(38-58),(76-112),(37-59),(75-111)
5900001100002310001
(60-74),(17-33)
5900001100002310002
(78-148),(79-149)
5900001100002560001
(2-74),(1-73)
5900001100002560002
(2-58),(1-71)
5900001100002780001
(60-62),66
5900001100002780002
(2-44),(1-43)
5900001100002800001
(46-84),(45-83)
5900001100002800002
(54-84),(53-85)
5900001100002900001
5900001100002900002
5900001100003230001
(24-56),(23-37)
5900001100003230002
3,19
5900001100003310001
(56-64),(59-65)
5900001100003310002
(12-138),(11-97)
5900001100003370001
6,10,(5-9)
5900001100003370002
5900001100003420001
(4-14),(1-17)
5900001100003420002
68,77
5900001100003540001
(4-58),(5-59)
5900001100003540002
(13-61)
5900001100003660001
5900001100003660002
(2-78),(1-71)
5900001100002330001
(4-10),(3-7)
5900001100002700001
5900001100000390001
(4-14),(3-11)
5900001100000400001
(4-64),(5-51)
5900001100000460001
(6-26),3
5900001100000300001
5900001100000420001
(2-82),(1-89)
5900001100003700001
(4-14),(3-9)
5900001100000550001
(32-58),(23-63)
5900001100000800001
(6-92),(5-95)
5900001100000930001
5900001100001020001
(4-20),(13-19)
5900001100001000001
(2-42),(3-33)
5900001100001290001
5900001100003930001
(36-110),(45-145),3,5
5900001100001410001
5900001100001490001
(12-104),(11-95)
5900001100001500001
(4-22),(3-19)
5900001100001790001
(2-28),(3-27)
5900001100001820001
(2-48),(7-63)
5900001100002050001
(2-20),(3-15)
5900001100002080001
(4-74),(3-91),1,1
5900001100002170001
(4-110),(1-103)
5900001100002140001
(4-16),(3-11)
5900001100002160001
(4-26),(3-23)
5900001100002240001
(8-56),(7-37)
5900001100002290001
5900001100002470001
(2-70),(1-41)
5900001100002550001
(14-16),(7-15)
5900001100002260001
5900001100002480001
(4-8),5
5900001100002300001
(4-6),(3-7)
5900001100002960001
(4-28),(3-27)
5900001100002820001
5900001100003000001
(4-14),(3-19)
5900001100002880001
(4-34),(3-33)
5900001100003120001
(2-36),(3-37)
5900001100000310001
(4-26),(3-19)
5900001100003190001
(2-152),(3-93)
5900001100003280001
5900001100000100001
5900001100000330001
8,10,14,16,18
5900001100000350001
(4-16),(3-5)
5900001100001090001
2¡,2¢,2£,2¦,2¤,2¥
5900001100001190001
(16-60),(1-15),31,39,39,43,41
5900001100003040001
5900001100003070001
(18-20),19
5900001100003210001
5900001100003220001
(18-44)
5900001100003330001
13,15,36
5900001100000340001
4,5
5900001100000600001
5900001100000620001
5900001100000940001
2,44,46,3,(11-61)
5900001100001170001
(14-18),(13-15)
5900001100002120001
5900001100002450001
4,10,11,16
5900001100003100001
11,11,13,15
5900001100000350002
31,30,32,34,35,27,29
5900001100002540001
6,10
5900001100002620001
(3-11),4,6
5900001100002630001
6,8,11,13,15,17,21,23,24,25
5900001100002650001
5900001100002980001
(23-27),1,3,5,7,9
5900001100003240001
3,11,23,25
5900001100003940001
5900001100003720001
(10-18),4
5900001100002670001
(10-22),(7-21)
5900001100003180001
4,31
5900001100002100001
5900001100002340001
5900001100002670002
(26-34),(23-31)
5900001100003180002
(4-12),(1-11)
5900001100000020001
5900001100000140001
(4-26),(3-27)
5900001100000260001
(2-16),(1-9)
5900001100000040001
3,6
5900001100000160001
5900001100000030001
6,7,8
5900001100000150001
(4-18),(3-7)
5900001100001840001
5900001100000060001
(4-8),(3-9)
5900001100000190001
(2-4),(3-7)
5900001100000240001
1600000100001200002
1600000100001200003
83,85,(52-56),119,121
1600000100002760004
69,(128-218)
1600000100001270005
22,24,26,28,30,32,34,36,38,40,42
1602100100001200001
422541
1673
1648
92420000000
1,3,5,7,10,11,12,13,14,16,18,20,22,24
1602100100002190001
422544
1,1 ,3,4,5,6
1602100100000500001
422540
17,17 ,19,21/28,23,23 ,25/23,27/8,29,31
1602100100000520001
35,37,39 ,41,41 ,43,43 ,45,45 ,47/10,49
1602100100000520002
49 ,51,53,55,57,57 ,59,28,30,32,34,36,38
1602100100000520003
40,42,44,46,48,50,56,58,60
1602100100000520004
5,7,9,13
1602100100000670001
22,24,26,28,30,32,34,36,38,40,42,44,46
1602100100001550001
50,52,54,56,58,60,60 ,53 ,57,57 ,57¡,59
1602100100001550002
61,61 ,63,65
1602100100001550003
19,21,22,23,24,25,27,30,32,34,36,38
1602100100000870001
1,3,4,4 ,5,6,7,8,8 ,9,10,11
1602100100001740001
13,15,15 ,17,17 ,21,22,23,24,25,26,28,29
1602100100001860001
30,32,34,36,38
1602100100001860002
27,29,33,60,64
1602100100001950001
1602100100002120001
3,5,9,12,14,16,18,19,20,22,24
1602100100000890001
422545
2,2 ,2¡,6,6 ,8,8 ,10,10 ,12,12 ,14,14 
1602100100000850001
16,18,20,21,22,23,24,25,27,32,37,41,43
1602100100000850002
1602100100001830001
1,2,3,5,6,7,8,9,10,11,12,13,14,15,16,17
1602100100001200002
18,19,20,21
1602100100001200003
1 ,4
1602100100001200004
422548
7,9,11,14,15/6,17,19,21
1602100100000500002
422549
62,66,68-144
1602100100000520005
15,17,19,19 ,21,22,23,24,27
1602100100001740002
2,4,5/2,6,6 ,8
1602100100000380001
422550
1602100100000870002
49,51,53
1602100100001550004
15,17,19,20,20 ,21,26,27,29,30,31,32,33
1602100100001020001
35,37,37 ,39,39 ,40,42,43,45,47,49,51,55
1602100100001020002
60,62,64,68
1602100100001020003
54,56,58,64,68,70,80,84,86,98,100,106
1602100100001200005
112,114,116,118,120,122
1602100100001200006
5,7,8,16,18,20
1602100100001860003
9,17,19,19 ,23,32,36
1602100100002190002
15,17,19
1602100100000850003
422551
2,4,6,8,8 ,10
1602100100000890002
2,2 ,2¡,6,7,8,8 ,9,10,11,12,13,16,17,18
1602100100001830002
19,20,21,23,24,25,26,32,37,39,41,43
1602100100001830003
1602100100002270001
1602100100000520006
422542
1,3,6,10,14,16
1602100100000670002
62,62 ,67
1602100100001550005
59,70
1602100100001020004
1602100100001420001
1602100100001420002
1-18,20-999
1602100100002000001
1602100100002000002
1602100100002120002
5,12,14,16,18,20,22,24/29
1602100100000520007
7,9,10,11,13,15
1602100100000380002
9,31,33,35
1602100100000870003
3,5,7,8,9,11,13,15,17,19,23,25,27,29,31
1602100100001550006
33,35,37 
1602100100001550007
1,2,2 ,3,4,6,8,8 ,10,12,12 ,14,16
1602100100001020005
1,2,4,6,8,10,11,12,13,15,21,23,25,54,56
1602100100001950002
1602100100001950003
4/1 ,6
7100200100000920001
301361
7146
70202501000
10,12,18,26,(32-38)
7100200100000920002
301371
(2-42),46,50,52,(1-19)
7100200100001060001
301364
(74-118),(45-101),(107-117)
7100200100001060002
301368
(1-19),21/22
7100200100001160001
301362
(22-32),36,38,(33-41)
7100200100001160002
1,5,7/1,15
7100200100001180001
(8-58),(9-57)
7100200100001180002
(52-134),(51-135)
7100200100001330001
301360
7100200100001330002
301369
(40-88),(17-87)
7100200100001400001
2,(14-38),1,(5-9)
7100200100001400002
(36-96),(37-95)
7100200100001460001
7100200100001460002
41,43/1,43/2,45,47,54
7100200100001620001
(2-38),40,(46-50),(1-37)
7100200100001620002
(4-16),5/2,(7-27),(37-71),73/25
7100200100001790001
7100200100001790002
301367
7100400100000920001
301530
7152
7122
70206501000
(1-93),(2-128)
7100400100000820001
73,(77-89),(60-84)
7100400100000500001
(74-110),(75-109)
7100500101100030001
301821
7150
7112
70408570000
(1-73),(2-72)
7100500101100030002
301822
(1-67),(2-40),(46-68)
7100500101100200001
7100500101100200002
301823
(1-25),51 ,(53-69),(2-22),(48-68)
7100500100000150001
301830
70408000000
(71-81),(72-82)
7100500100000150002
301831
25 ,(27-51),(24-46)
7100500100000150003
301836
7100500100000170001
(59-61)
7100500100000170002
301832
(1-51),55,(10-50)
7100500100000170003
301835
(81-129),(82-120)
7100500100000390001
7100500100000390002
41,45,(42-52)
7100500100000390003
(47-75),(54-76)
7100500100000390004
(115-149),(155-159),(96-122)
7100500100000420001
7100500100000420002
(45-111),(34-92)
7100500100000420003
(139-171),(92-170)
7100500100000430001
(3-15),(4-16)
7100500100000430002
(31-61),(127-135),(18-44),(82-88)
7100500100000430003
(73-121),46,(54-80)
7100500100000430004
(3-27),4,(14-22)
7100500100000450001
7100500100000450002
(51-67),(50-68)
7100500100000510001
(25-49),(20-48)
7100500100000510003
(1-9),(23-45),(38-50)
7100500100000540001
(11-19),2 ,(10-36)
7100500100000540002
(7-17),(2-18)
7100500100000740001
(75-105),(98-126)
7100500100000790001
(3-21),(2-52)
7100500100000790002
(23-73),(54-96)
7100500100000790003
(21-49),(30-72)
7100500100000830001
7100500100000830002
(1-23),(4-12)
7100500100000850001
(25-55),(103-123),(16-28),(74-84)
7100500100000850002
(59-73),(81-99),(44-54),68,70
7100500100000850003
(1-23),(8-28)
7100500100000690001
7100500100000690002
7100500100000940001
(1-5),11,(2-8),14
7100500100000940002
(29-33),(39-61),(30-42),46,52,56
7100500100000940003
(21-51),(34-42)
7100500100000950001
7100500100000950002
(13-25),22,24
7100500100000710001
7100500100000710002
(1-23),41 ,36
7100500100000980001
(63-93),(76-114)
7100500100000980002
7100500100000980003
(25-61),(42-72)
7100500100000980004
1,1£,2¡
7100600100000170001
301320
7147
7123
70212501000
9,2,(4-8)
7100600100000170002
301321
(25-41),(18-28),4/51
7101000100000330001
301841
7142
7113
70220501000
7101000100000330002
301845
(1-45),(2-68)
7101000100000140001
301840
(47-103),(72-132)
7101000100000140002
301848
(19-85),(26-136)
7101000100000030001
7101000100000030002
(25-105),(18-72)
7101000100000020001
(1-17),(2-10),14
7101000100000020002
7101000100000010001
25,(42-52)
7101000100000010002
(17-31),(18-44)
7101000100000350001
7101000100000050001
7101000100000050002
7101000100000090001
7101000100000090002
301842
8,8 ,10,12
7101000100000090003
(41-45),59,65,69,44
7101300100000090001
301721
7153
7115
70226501000
(3-29),6,(10-22)
7101300100000090002
301720
7101300100000340001
301723
2,4,(3-9)
7101300100000340002
(1-9),(13-23),(27-35)
7101300100000350001
(2-30),(34-44)
7101300100000350002
31 ,31¡,31¢,39,39 ,46,48
7101300100000350003
7101300100000400001
7101300100000400002
(11-21),(16-22),10,12
7101300100000400003
13 ,15,17,21,23,29/25,25/27,31,(18-22)
7101300100000480001
11-14
7101300100000480002
(3-9),6,8
7101300100000480003
20,24
7101300100000730001
23,26
7101300100000730002
7101400100000020001
301262
7128
70228501000
7101400100000020002
301260
(1-7),(2-10),14
7101400100000240001
(9-31),(16-30),12
7101400100000240002
(37-47),38,46,48
7101400100000230001
(1-35),(2-36),40
7101400100000230002
14,15
7101400100000820001
7101400100000820002
6-14
7101400100000350001
7101400100000350002
21,(16-26)
7101400100000490001
70228000000
5-12
7101400100000680001
7101400100000680002
10-17
7101400300000040001
301264
70228513000
7101400300000040002
301265
7101400300000220001
7101400300000220002
7/15,(9-29),(12-34)
7101700100000030001
301650
7116
70234501000
7101700100000030002
301664
7101700100000070001
301657
7101700100000070002
1,(3-7),11,13,(2-14)
7101700100001040001
1 ,9
7101700100001040002
(1-25),8,8
7101700100000150001
301665
(27-33),12,22
7101700100000150002
301668
5,5,(13-39),14,14,(24-34)
7101700100000200001
2,4,4,(16-20)
7101700100000200002
301659
(3-25),8
7101700100000220001
(29-61),(20-42)
7101700100000220002
7101700100000230002
301662
11,27,29 ,29¡,(10-32)
7101700100000260001
7101700100000260002
(24-32),(23-35)
7101700100000310001
(37-61),(34-46)
7101700100000310002
7101700100000310003
7101700100000340001
301654
7101700100000340002
301661
7101700100000340003
7101700100000340004
(13-45),(10-34)
7101700100000380001
7101700100000380002
85,100,101
7101700100000460001
301652
(1-69),(2-82)
7101700100000460002
1,3,27 ,(2-20)
7101700100001100002
7101700100002390001
301660
7101700100002390002
301651
17-46
7101700100001170001
7101700100001170002
10 
7101700100000650001
7101700100000650002
1,(3-37),2,(4-40)
7101700100001210001
1 ,1¡,2 
7101700100001210002
7101700100000670001
301663
7101700100000670002
301670
(15-39),(16-50)
7101700100000680001
(63-77),(68-78)
7101700100000680002
7101700100000680003
(21-33),(2-6),68
7101700100000720001
7101700100000720002
7101700100000720003
(9-45),8,(38-46)
7101700100001250001
7101700100001250002
(1-31),(24-40)
7101700100000730001
(33-37),(42-56)
7101700100000730002
(2-12),(18-22)
7101700100000730003
(17-31),(12-24)
7101700104300030001
301680
(3-15),10
7101700104300030002
301681
7101700104300160001
(13-61),(10-70)
7101700104300160002
(1-21),(4-8)
7101700104300040001
(18-30),(37-41)
7101700104300040002
33,(41-73)
7101700104300200001
(1-31),(35-39),(2-4)
7101700104300200002
7101700104300070001
(1-9),4,6,(18-22)
7101700104300070002
(19-25),(18-20)
7101700104300090001
7101700104300090002
7101700104300120001
(27-47),(26-48)
7101700104300120002
7101700104300100001
(3-25),(26-38)
7101700104300100002
1/2,(2-6)
7101700104300110001
(1-61),(12-68)
7101700104300110002
1-101
6901500100000790002
171254
23 ,(40-58),66,(27-47),53 
3400000100004760003
(97-199),(92-102)
3400000100028810002
3400000100013400002
(202-218),(251-265)
3400000100013810001
80,80,82,82,82
3400000100014210001
(63-65),(66-72)
3400000100014210002
275,279,(403-407)
3400000100027690003
3400000100027300001
25,32,32 
3400000100027300002
3400000100017880002
3400000100027800001
400063
1-16,21,22,29
3400000100026610001
3400000100027780001
17,19,21,25
3400000100027110001
2-5,7-11,13-16,18,19,30,32,34
3400000100027280001
3400000100026960001
(125-133),(60-86)
3400000100017750001
3400000100009300001
1,3,11,15
3400000100002630001
3-9,11,13
3400000100001160001
400072
3400000100011460001
3400000100027930001
3400000100009940001
3400000100017910001
3400000100027440001
3400000100028170001
3400000100026530002
11,13,(14-26),(25-35)
3400000100026510002
3400000100010550001
3400000100012210003
3400000100026660002
(1-9),(2-6),10
3400000100027130001
400110
3400000100027700001
3400000100027340001
3400000100027370001
3400000100003750001
3400000100026580001
3400000100017810001
(29-49),(32-60)
3400000100026620001
(1-17),(2-56)
3400000100026780001
3402400100000520001
404264
3454
3423
18245501000
5,7,27-39
3402400100000520002
404263
3402400100000970001
25-46
3402400100000970002
38-48
3402400100001050001
404261
3402400100001050002
1-21,23,25-31
3402400100001000001
3402400100001000002
1,21
3402400100000960001
3402400100000960002
3402400100000840001
39-65
3402400100000840002
404262
3402400100000830001
35-67
3402400100000830002
3402400100000670001
3402400100000670002
3402400100000660001
35-40
3402400100000660002
1,29-84
3402400100000570001
2-28
3402400100000570002
6,7
3402400100000500001
1-5,8-11
3402400100000500002
3402400100000480001
2,4,6,7,8,10,12,16
3402400100000480002
1-61,63,65,67,69-79
3402400100000380001
62,64,66,68,81
3402400100000380002
3402400100000350001
34-83
3402400100000350002
3402400100000310001
36,38,40,42,44,33,35,39,43,45,47
3402400100000310002
1-31,33
3402400100000240001
32,34,36,38,35,37,39,43
3402400100000240002
1-33,35,37,39,41,43-117
3402400100000070001
34,36,38,40,42,119,121,123,125,127,129
3402400100000070002
1-160
3401700100000040001
404621
3415
18230501000
161-258
3401700100000040002
404620
1-87
3401700100000120001
88-177
3401700100000120002
3401700100000700001
128-375
3401700100000700002
3401700100000600001
404622
44-125
3401700100000600002
3401700100000610001
47-56
3401700100000610002
3-53,55-59,54,54,54
3401700100000630001
60-87,54
3401700100000630002
1-79
3401700100000670001
80-119
3401700100000670002
3401700100000770001
66-124
3401700100000770002
(1-43),(2-32)
3400000100029160001
(45-85),(34-68)
3400000100029160002
(87-105),(72-101)
3400000100029160003
(39-51),46,48
7600000100001240002
150060
(97-123)
7600000100003980006
(20-48),62
7600000100005990005
7600000100010140005
7600000100005990006
7400000100007660001
(2-84),(1-133)
3301100100000350001
13,49,76
3300000100003440003
25,27,66
3300000100003100004
46
3300000100002910003
(100-120)
7100000100001390004
(101-119)
7100000100001390005
(8-46),(7-49)
7101700100000230001
(13-27),(29-35),(32-52)
7101700100001100003
7000000300000060001
(16-30),(1-37)
7000000300000060002
5900000100006960002
1,3,10
5900000100011620001
(15-999),(16-998)
5900000100011620002
5900000100011440001
5900000100011440002
5900000100012820001
(49-999),(60-998)
5900000100012820002
5900000100013030001
(24-998),(11-999)
5900000100013030002
5202800100002060003
1 ,68
3300000100002650004
36,36/141
7800000000011460017
(60-64),85-999
5600000400063090001
(2-48),(1-73)
5600000400063090002
(50-58),(75-83)
5600000400063090003
5600000400009570006
(61-81),62,64,66,68,(78-84)
5600000400033240011
5600000400033300001
5600000400036030001
8,8,8,10,10
5600000400036030007
5600000400036630003
5600000400069300002
60-67
5600000400036510005
(30-44),(29-113)
5600000400039990001
(88-162),(159-209),210-225
5600000400039990006
5600000400052530001
5600000400054060001
5600000100010330003
(28-50)
5600000100010330004
1900000100000020001
655018
1901
95401000000
(19-999),(56-62)
1900000100000020002
655012
1900000100000060001
655002
(69-209),(58-998)
1900000100000060002
655009
(211-999)
1900000100000060003
655014
(1-153),(2-130)
1900000100000140001
655017
(155-999),(132-998)
1900000100000140002
655001
(1-255),(2-224)
1900000100000080001
(257-999),(226-998)
1900000100000080002
655004
224 
1900000100000080003
1900000100000130001
655011
1900000100000130002
1900000100000150001
1900000100000150002
2-50
1900000100000110001
(1-25),(2-50)
1900000100000270001
(1-3),(2-30)
1900000100001140001
(9-999),32
1900000100001140002
(1-61),(2-38)
1900000100000300001
(63-999),(40-998)
1900000100000300002
655003
1900000100000320001
1900000100000320002
1900000100000380001
(73-999),(66-998)
1900000100000380002
(1-7),2,4,4 
1900000100000370001
(9-999),(6-998)
1900000100000370002
(13-147),(46-154)
1900000100000460001
(149-999),(156-998)
1900000100000460002
1900000100000520001
655016
36,(40-50)
1900000100000520002
655010
1900000100000520003
655008
(1-75),(2-80)
1900000100000530001
(79-999),(84-998)
1900000100000530002
1900000100000540001
1900000100000540002
1900000100000690001
1900000100000690002
1900000100000670001
1-9,10,11-999
1900000100000670002
1-6,7,8,9,10,11,12,13,14-999
1900000100000310002
1900000100000730001
(69-81),(52-64)
1900000100000730002
(1-41),(2-70)
1900000100000950001
(43-69)
1900000100000950002
1,3-31
1900000100000770001
1900000100000770002
(3-9),(4-20)
1900000100000920001
1900000100000850001
(35-77),(56-998)
1900000100000850002
(1-127),(2-16),18,(20-156)
1900000100000800001
18 
1900000100000800002
103,(129-177),(158-206),208
1900000100000800003
(203-999),208 ,(210-998)
1900000100000800004
(1-39),(2-56)
1900000100000970001
(41-49),(72-76),68
1900000100000970002
(82-94)
1900000100000970003
(65-999),(96-998)
1900000100000970004
1900000100000890001
1900000100000890002
(53-999),(64-998)
1900000100000890003
1900000100000750001
1900000100000750002
1900000100000870001
(47-49)
1900000100000870002
11,(2-12)
1900000100000860001
(14-28)
1900000100000860002
1900000100000720001
7,(2-20)
1900000100000720002
(13-17),(22-26)
1900000100000720003
3,(9-75),(2-18)
1900000100001000001
(79-999),(20-998)
1900000100001000002
1900000100001010001
1900000100001010002
1900000100001070001
1900000100001070002
1900000100001030001
(29-121),(36-142)
1900000100001030002
(123-999),(144-998)
1900000100001030003
(1-69),(2-48),54
1900000100001080001
1900000100001080002
1900000100001100001
1900000100001100002
1900000100001040001
1900000100001040002
(1-49),(2-28)
1900000100001150001
(51-65),(30-44)
1900000100001150002
1900000100001240001
(39-999),(56-998)
1900000100001240002
1900000100000560001
(9-61),(12-44)
1900000100000560002
(63-999),(46-998)
1900000100000560003
1900000100001220001
(25-65),(14-998)
1900000100001220002
(11-13),(2-34)
1900000100001230001
(15-999),(36-998)
1900000100001230002
(4-6),8,12
1900000100001340001
1,(7-37),(18-20)
1900000100001340002
(22-999)
1900000100001340003
1900000100001280001
1900000100001280002
(1-15),(31-53),(75-95),(115-129)
1900000100001360001
1900000100001360002
(17-29),(55-73),(97-113)
1900000100001360003
(1-21),(2-64)
1900000100001370001
(1-5),(6-8)
1900000100001420001
1900000100001420002
1900000100001440001
1900000100001440002
1900000100001430001
1900000100001430002
1900000100001500001
(63-999),(64-998)
1900000100001500002
1900000100001650001
(51-999),(58-998)
1900000100001650002
(1-5),(33-39),(2-34)
1900000100001480001
1900000100001480002
1900000100001660001
(95-199),(48-126)
1900000100001660002
(203-999),(128-998)
1900000100001660003
(5-17),(2-42)
1900000100001460001
(19-999),(44-998)
1900000100001460002
1900000100001610001
(9-49),(12-46)
1900000100001610002
1900000100001620001
(15-31),(32-54)
1900000100001620002
1900000100001730001
1900000100001730002
1900000100001740001
1900000100001740002
(1-67),(2-998)
1900000100001780001
1900000100001780002
(1-77),(2-40)
1900000100001860001
(42-998)
1900000100001860002
1900000100001840001
(17-999),(20-998)
1900000100001840002
(2-6),10
1900000100001960001
7,9,16,20
1900000100001960002
1900000100001880001
(61-999),(68-998)
1900000100001880002
(1-103),(4-88)
1900000100001870001
(105-999),(90-998)
1900000100001870002
1900000100001810001
(33-999),(24-998)
1900000100001810002
1900000100001970001
1900000100001970002
1900000100001990001
1900000100001760001
1900000100002040001
(43-141),(42-90)
1900000100002040002
1900000100002040003
1900000100002000001
1900000100002000002
(57-125),(68-126)
1900000100002000003
(127-999),(128-998)
1900000100002000004
(1-111),(2-78)
1900000100002030001
(113-999),(80-998)
1900000100002030002
(3-71),(2-76)
1900000100002110001
1900000100002110002
(14-18)
1900000100002100001
1900000100002100002
15,17,19,23,25,(24-26)
1900000100002100003
1900000100002020001
1900000100002170001
1900000100002170002
1900000100002200001
1900000100002200002
(1-19),21,(2-26)
1900000100002210001
(23-163),(30-134)
1900000100002210002
(165-999),(136-998)
1900000100002210003
(1-73),(16-64)
1900000100002220001
(75-999),(66-998)
1900000100002220002
1900000100002230001
(147-153),(136-146)
1900000100002230002
(1-131),(2-124)
1900000100002320001
(133-999),(126-998)
1900000100002320002
(1-79),(2-122)
1900000100002270001
1900000100002270002
1900000100002270003
1900000100002250001
(75-999),(76-998)
1900000100002250002
(13-67),(12-72)
1900000100002330001
(69-999),(74-998)
1900000100002330002
(1-133),137,(2-224)
1900000100002310001
135,(139-999),(226-998)
1900000100002310002
1900000100002350001
1900000100002350002
1900000100002410001
(29-999),(48-998)
1900000100002410002
1900000100002430001
(39-999),(36-998)
1900000100002430002
1900200000100010001
655650
95205810001
1900200000100020001
1900200000100030001
(1-153),(2-160)
1900200000100040001
1900200000100050001
1900200000100060001
1900200000100070001
1900200000100090001
1900200000100100001
1900200000100120001
1900200000100130001
(1-155),(2-180)
1900200000100140001
(3-163),(4-194)
1900200000100150001
1900200000100160001
1900200000100170001
1900200000100180001
1900200000100190001
(1-269),(2-240)
1900200000100200001
1900200000100210001
1900200000100220001
1900200000100230001
(1-115),(2-78)
1900200000100240001
1900200000100250001
(1-139),(2-118)
1900200000100260001
1900200000100270001
1900200000100280001
1900200000100290001
1900200000100300001
(1-93),(2-56)
1900200000100310001
1900200000100320001
1900200000100330001
1900200000100340001
1900200000100350001
1900200000100360001
1900200000100370001
1900200000100380001
1900200000100390001
1900200000100400001
(1-107)
1900200000100410001
(1-119),(2-98)
1900200000100420001
1900200000100470001
1900200000100430001
(1-53),(2-50)
1900200000100440001
1900200000100480001
1900200000100490001
1900200000100500001
1900200000100510001
1900200000100520001
1900200000100450001
(1-9),(2-44)
1900200000100460001
1900200000300010001
655682
95205805001
1900200000300020001
(1-125),(2-122)
1900200000300030001
(1-59),(2-66)
1900200000300040001
(1-19),(2-70)
1900200000300050001
1900200000300060001
1900200000300070001
1900200000300080001
1900200000300090001
1900200000600020001
655681
95205818001
1900200000600010001
1900200000600030001
1900200000600040001
1900200000600050001
1900200000600060001
1900200000600070001
1900200000600080001
1900200000600090001
1900200000600100001
1900200000600110001
1900200000600120001
1900200000600130001
1900200000600140001
1900200000700010001
655666
95205810002
(1-81),(2-72)
1900200000700020001
1900200000700030001
1900200000700040001
1900200000700050001
1900200000700060001
1900200000700070001
1900200000700080001
1900200000700090001
1900200000800010001
655672
95205820001
1900200000800020001
1900200000800030001
1900200000800040001
(1-107),(2-90)
1900200000800050001
(3-145),(2-122)
1900200000800060001
1900200000800070001
1900200000800080001
1900200000800090001
1900200000900010001
655683
95205825001
1900200000900020001
1900200000900030001
1900200000900040001
1900200000900050001
1900200000900060001
(1-29),(2-50)
1900200000900070001
1900200001000010001
655676
95205835004
1900200001000020001
1900200001000030001
1900200001000040001
1900200001000050001
1900200001000060001
1900200001300010001
655675
95205830001
1900200001300020001
(1-99),(2-104)
1900200001300030001
1900200001300040001
1900200001400010001
655665
95205835001
1900200001400020001
1900200001400030001
1900200001400040001
1900200001400050001
1900200001400060001
1900200001400070001
1900200001400080001
1900200001500140001
655674
95205840001
(1-67),(2-90)
1900200001500040001
(1-169),(2-166)
1900200001500050001
1900200001500060001
(1-10)
1900200001500070001
(1-187),(2-234)
1900200001500090001
(1-77),(2-56)
1900200001500100001
(1-119),(2-158)
1900200001500110001
1900200001500120001
1900200001500130001
83,(2-128)
1900200001600010001
655670
95205845001
(23-27),(24-26)
1900200001600020001
1900200001600040001
19,(18-22)
1900200001600050001
1900200001600060001
1900200001600070001
1900200001600080001
1900200001600090001
1900200001600100001
1900200001600110001
1900200001600120001
1900200001600130001
1900200001600140001
1900200001600150001
3,(2-4)
1900200001600160001
1900200001600170001
(1-45),(2-60)
1900200001600180001
(11-15),(12-16)
1900200001600190001
1900200001600200001
1900200001600210001
1900200001600220001
1900200001600240001
1900200001600250001
(5-9),(6-10)
1900200001600260001
1900200001600270001
1900200001600290001
(3-39),(2-38)
1900200001600300001
1900200001600310001
1900200001600340001
1900200001600350001
1900200001600360001
1900200001600380001
1900200001600390001
1900200000200010001
95205820002
1900200000200030001
1900200000200040001
1900200000200060001
(3-11),(2-20)
1900200000200080001
1900200000200090001
1900200000200100001
1900200001800010001
95205825002
1900200001800020001
1900200001800030001
(1-85),(2-60)
1900200001700010001
95205805002
1900200000500010001
95205835003
1900200000500020001
1900200000500030001
1900200000500040001
1900200001100010001
95205835005
1900200001100020001
1900200001100030001
1900200000400010001
95205835002
1900200000400020001
1900200000400030001
1900200000400040001
1900200001200010001
95205840002
1-16,22-32,35,45-47
5400100003200000001
630559
5475
5433
50240552000
(3-39),(8-34)
3600000100005280003
3600000100002090001
3600000100002090002
(1-91),(2-146)
3600000100006490001
(160-998)
3600000100006490002
394048
3600000100008460001
3600000100008460002
3600000100008990003
3600000100009320001
(8-998),(9-999)
3600000100009320002
3600000100009780001
3600000100009780002
3600000100002950001
3600000100002950002
7601700100000790003
4402400100001390002
1-19,23,28
5502100007800000001
644527
5528
52244844001
(56-998),(51-57)
5500000100007850004
87
3300000100000930004
(47-53),(52-54)
7800000000009280003
(155-159)
7800000000008520013
(4-154),(1-149)
7200000100006830001
(160-200),(155-191)
7200000100006830002
(65-99),(66-128)
2700000100000010001
680032
(101-205),(130-178)
2700000100000010002
680014
(207-237),(180-212)
2700000100000010003
(5-19),(2-36)
2700000100000260001
680022
(21-39),(40-50)
2700000100000260002
(57-63),(62-66)
2700000100000260003
2700000100000380001
2700000100000380002
,(8-10)
2700000100001080001
2700000100001080002
(5-9),(4-10)
2700000100001090001
2700000100001090002
680017
(87-101),(70-148)
2700000100001090003
(1-51),(6-134)
2700000100001530001
(53-139),(138-162)
2700000100001530002
3,28
2700000100001590001
2700000100001590002
2700000100003160001
(19-93),(34-118)
2700000100003160002
(111-205),(118-186)
2700000100011310003
3,7,17,19,25
2700000100005760001
13,15,21,21,23,
2700000100005760002
680052
2700000100006780001
(15-39),(30-50)
2700000100006780002
(1-9),(8-10)
2700000100007210001
(11-25),(12-20)
2700000100007210002
2700000100009900001
(31-105),(34-82)
2700000100009900002
80,87
2700000100010460005
2700000100002110001
9-19
2700000100002110002
70,114,97,71
7400000900001850010
455099
7400000900000840004
172
7400000900001370013
(200-208)
7400000900001370014
7400000900003170010
(166-172)
7400000900003170011
(160-164)
7400000900003170012
7400000902400110001
(30-76)
7400000901900010001
(78-132)
7400000902100060001
7400000900000680005
3700000100014670001
(31-999),(12-999)
3700000100014670002
3800001100000450002
665451
3819
25436000000
3800001100000450003
665462
(39-73),(2-30)
3800001100000450005
665463
3800001100000160001
665459
3800001100000360001
665460
20-21
3800001100000360002
3800001100000470001
665452
3800001100000470002
3800001100000580001
3800001100000580002
3800001100000580003
3800001100000580004
665458
3800001100000580005
(27-77),79
3800001100000580006
12,14,18,20,(22-998)
3800001100000750001
1-11,13,15-17,19,(21-999)
3800001100000750002
6,8,10,14,18,20,22,26,(30-998)
3800001100000710001
2-5,7,12,16,24,28
3800001100000710002
(9-999),1
3800001100000710003
665466
85-999
3800001100000780002
(1-65),(2-84)
3800001100000780003
(67-83)
3800001100000780004
(1-61),(2-14)
3800001100000960001
(16-998),(63-999)
3800001100000960002
(5-999),(20-998)
3800001100001550001
1,3,(2-18)
3800001100001550003
3800001100001670001
3800001100001670003
55-999
3800001100001710001
3800001100001710002
(1-999),(2-12)
3800001100000890001
3800001100000890002
665453
3800001100000630001
3800001100000630002
3800001100000160003
(29-999),(24-998)
3800001100001010001
3800001100001010002
79,79,81
3800001100000580007
3800001100000800001
3800001100000800002
6100000100018570001
(124-128),132,(140-168)
6100000100008160004
2,4,(9-21)
6100000100015400001
68,(72-80)
6100000100017320003
(357-421),(308-376)
6100000100007110001
(273-323),(242-282)
6100000100007110002
(1-65),(2-44)
6100000100007110004
(67-271),(46-240)
6100000100007110005
(111-149),(72-106)
6100000100009510007
(53-105),(50-72)
6100000100013110007
(37-83),(38-68)
6100000100015730003
(37-71),(18-64)
6100000100016210003
6100000100003300001
344113
(8-999),(3-999)
6100000100003300002
344114
6100000100004080001
6100000100004080002
(2-16),(1-999)
6100000100005360001
344092
(18-999)
6100000100005360002
,(4-20)
6100000100007590001
6100000100007590002
(9-25),(10-30)
6100000100007790001
1,1,1,1,(3-7),(2-8)
6100000100007790002
27,29
6100000100007790003
6100000100007820001
(21-999),(16-999)
6100000100007820002
(1-7),(2-48)
6100000100011560001
(50-999),(9-999)
6100000100011560002
6100000100017830001
6100000100017830002
(10-999)
6100000100004550004
(141-999),(90-998)
6100000100008750004
6100000100011410004
6100000100010610009
1600000100016230003
8,5,12
1600000100004090001
2,3 ,4,7
1600000100004090002
4200000400000160004
(55-121)
4200000400000160005
(12-94)
4200000400000160006
4200000700000150005
4200000700002080005
4200000700002080006
(30-62)
4200000700001360009
(72-130)
4200000700001360010
31ª¡
4200001300004060008
107ª
4200001300011850003
4200001300012060004
1,3,7
4200001300011430004
90ª
4200001300011430005
49-109
4200001300004060010
4200001200004270001
3
4200001200009660005
4200001200007400001
43,44,53
4200001200007400002
4200000400000060001
4200000400000060002
(45-163)
4200000400000060003
(22-98)
4200000400000060004
1-2,4-25
1100000100000270001
1100000100000270002
1100000100002170001
5,7,10
1100000100002170002
1100000100001670001
167003
1100000100001670002
1-20,22-50
1100000100001890001
1100000100001890002
1100000100001050001
14/30
1100000100001050002
(1-9),2
3400000100028210003
(1-7),2,2 
3400000100000420003
3400000100008360001
(2-20),(54-76)
3400000100008360002
4 ,6,10
3400000100002350002
1,5,(7-13)
3400000100002170008
(21-27),77,95/1,95/2
3400000100004800003
161
3400000100004800004
400036
(81-115),90
3400000100028320002
(92-96)
3400000100028320003
(117-175),(98-120)
3400000100028320004
74 ,74¡,74£,74¤,80 ,(86-96),110
3400000100005790003
74,74¢,76,78,80,82,82 ,82¡,82£
3400000100005790004
400138
3400000100005900002
(101-105),(102-110)
3400000100017610001
400019
(25-49),12 ,(14-40)
3400000100006660002
(30-46)
3400000100026440002
3400000100026440003
(5-21),(6-38)
3400000100004760001
(31-65),(75-83),(34-56),(68-76)
3400000100004750002
6,(7-25),27¡,(16-40),44,(54-64)
3400000100023130002
3400000102300000001
1801800100000230002
427790
1839
94430000000
(54-78),(53-121)
1801800100000230001
427793
1801800100000390001
1801800100000390002
427797
(1-29),(2-56)
1801800100000430001
427791
1801800100000600001
427792
(2-28),(33-81)
1801800100000600002
427795
85,105
1801800100000600003
1801800100000870001
(42-94),(43-83)
1801800100000870002
(14-62),(13-77)
1801800100000830001
1801800100000830002
(24-68),(17-73)
1801800100001040001
1801800100001040002
(76-154),(55-131)
1801800100000800002
(84-100),(73-93)
1801800100001150001
(2-32),(1-71)
1801800100001150002
1801800100001420001
(68-146),(51-141)
1801800100001420002
(3-43),(2-44)
1801800100001420003
(2-152),(1-115)
1801800100001460001
(170-182),(179-269),186
1801800100001460002
(154-162),(117-177)
1801800100001460003
1801800100001760001
(54-110),(63-97)
1801800100001760002
(2-52),(1-37)
1801800100001830001
(54-126),(39-107)
1801800100001830002
(2-70),(1-51)
1801800100001920001
80,63
1801800100001920002
(2-76),(1-61)
1801800100002000001
1801800100002000002
(2-18),(1-31)
1801800100002170001
(86-136),(41-111)
1801800100002170002
(22-84),33
1801800100002170003
(2-16),(17-37)
1801800100002440001
1801800100002440002
(2-26),(1-21)
1801800100002620001
(28-100),(23-127)
1801800100002620002
(167-237),(144-196)
6100001100006410001
(239-301),(198-300)
6100001100006410002
3300800100000930001
3300800100000930002
1,4,6,7,8
3300800100001610001
3300800100002470003
(108-116)
5500000100006590003
(1-12),(10-22)
4600000100004660001
(13-313),(24-310)
4600000100004660002
4600000100002910001
15-35
4600000100002910002
(198-496),498,498,(213-427)
4600000100001040003
6100001200000270001
6100001200000270002
6100001200000480001
(51-97),(50-106)
6100001200000480002
(1-31),(2-18),20
6100001200001840001
(33-145),(20-70)
6100001200001840002
6100001200009980001
(35-43),(22-60)
6100001200009980002
6100001200010020001
(63-167),(74-182)
6100001200010020002
6100001200002310001
(1-71),(4-82),2
6100001200002310002
(49-77),(2-48)
6100001200008690001
(79-127),(100-128)
6100001200008690002
(1-217),219 ,(2-198)
6100001200009040001
(225-243),(200-228)
6100001200009040002
2200000100000770001
(1-35),(57-75),(2-60)
2200000100001010001
(80-100)
2200000100003330007
2200000100005670005
2200000100005890004
2200000100005890005
(40-102),(41-105)
2200000100006910001
2200000100008150010
656041
(186-194),(307-337),156
2200000100004530009
656922
(1-61),(2-60)
2200000100003720001
2200000100008010004
(63-999),(62-998)
2200000100003720002
2200000100006300003
2200000100005700001
2200000100005700002
2200000100003180007
656099
4301300100000670003
4301300100000260003
1,3,5,7
5200000300000020001
(2-12),(9-17)
5200000300000020002
(2-12),(1-29)
5200000300000140001
5200000300000140002
607190
5200000300001040001
(2-20),(9-17)
5200000300001040002
5200000300000440003
1800000200000010008
427968
94440000000
(44-104)
1800000200000010009
102,(134-178),75,85,87,(101-105)
1800000200000020001
427964
180
1800000200000020012
427990
1800000200000020014
427966
(65-67),(90-100),(60-88),(37-57)
1800000200000020019
427974
(11-35),(14-58)
1800000200000020033
427960
(1-5),6-17,(18-38),39
1800000200000010017
1800000200000010001
1800000200000030001
(55-67),(69-81),(46-80)
1800000200000050001
427962
(8-20),(11-27),28 ,28¡,30
1800000200000050002
1800000200000090001
1800000200000100001
1-8,(14-48),(15-39)
1800000200000150001
(5-41),(2-34)
1800000200000170001
(56-70),(74-78),55,67,75,85,89
1800000200000170002
427967
1800000200000180001
(82-88),(93-99)
1800000200000200001
1800000200000200002
(13-23),(14-34)
1800000200000200003
427970
1-69
1800000200000210001
(67-81),43,(58-76),52
1800000200000200004
(55-71),75,77,81,(58-102),106,108
1800000200000230001
(1-53),(6-56)
1800000200000230002
1800000200000250001
1800000200000260001
(19-23),(39-61)
1800000200000280001
(54-66),(32-36),42,(14-28),13
1800000200000280002
1,1 ,1¡,2,2 ,2¡
1800000200000280003
1 ,1¡,2¢
1800000200000290001
(3-15),(20-26),4,19,28,30
1800000200000300001
9,11,11 ,12,13,15,18 ,18¡,(22-30)
1800000200000290002
(1-27),(2-16),18,20,29-32,37
1800000200000310001
1800000200000360001
53,55,(61-75),(60-74)
1800000200000360002
(52-56),(28-40),(39-47),53 
1800000200000360003
(90-102),(99-115)
1800000200000360004
(46-134),(77-143)
1800000200000370001
1800000200000380001
(3-21),(51-61),(2-44)
1800000200000380002
1800000200000420001
1800000200000420002
(19-35),(34-42),(50-62)
1800000200000420003
(70-104),(63-107)
1800000200000420004
(1-15),23,27,33,(2-12)
1800000200000430001
(1-7),(11-23),2,6
1800000200001020001
427961
(8-20),(1-13),(2-6)
1800000200000520001
427965
1800000200000640001
(87-93),116,118
1800000200000640002
(42-44),(58-64),33,35,(55-59)
1800000200000640003
1800000200000650001
(73-77),85,(82-92),(101-105)
1800000200000650002
42,44,47,53,59,67,71
1800000200000650003
(1-23),(2-16),28,28 ,32,36,37
1800000200000670001
29,29 ,29¡,31
1800000200000670002
(9-31),(44-58),(39-65),(20-30),96
1800000200000690001
2 ,(3-5)
1800000200000690003
(51-153),(40-112)
1800000200000760001
1800000200000760002
(114-128),140,142,(150-170),(167-179)
1800000200000760003
(155-157),(161-163),(189-233)
1800000200000760004
(2-38),(1-9)
1800000200000820001
1800000200000820002
(38-44),(50-64),(20-30),78,80
1800000200000870001
(1-7),(2-8),11,17
1800000200000870002
(9-15),(17-33)
1800000200000890001
1,1 ,1¡,2£,2¤,2¥,2§,2¦
1800000200000890002
(1-7),2,4,6
1800000200000890003
427972
1,1 ,1¡
1800000200001000001
(16-60),(5-59)
1800000200001000002
(25-97),(20-30)
1800000200001020002
(45-61),(52-64)
1800000200001050001
1800000200001050002
1,3,9¡,(2-16)
1800000200001090001
(18-178),(11-59),65,67
1800000200001090002
(28-42),(23-33)
1800000200001130001
(1-9),(2-14),16¡,19 ,21
1800000200001130002
(100-168),(72-82),92,94
1800000200001170001
(49-61),71,73,(77-87),(93-135)
1800000200001170002
(1-5),(33-41),(19-27),(55-60)
1800000200001170003
(16-24),10¡,12¡,12¢
1800000200001170004
1800000200001190001
1800000200001190002
(20-28),(44-50),(54-66),(72-80)
1800000200001230001
(3-37),(12-58)
1800000200001290001
(53-59),(60-80),41
1800000200001290002
1800000200001320001
(25-33),(24-30)
1800000200001320002
1800000200001370001
1800000200001400001
(92-130),(119-143)
1800000200001400002
(81-115),(17-61),(60-76),(20-40),90 
1800000200001400003
1800000200001230002
(102-112),(57-61)
1800000200001370002
(88-92),(49-55),(11-45),(62-84),34
1800000200001370003
1800000200001370004
(1-51),(2-34)
3800000700001560001
665390
3814
25420000000
3800000700001560002
665385
1,3,10,12-99
3800000700000140001
665383
3800000700000140002
665393
(1-99),(20-98)
3800000700000150001
3800000700000150002
3800000700000160001
(25-59),(28-82)
3800000700000160002
665388
(1-99),(2-118)
3800000700000180001
(101-175),(120-204)
3800000700000180002
3800000700000220001
(9-99),(8-98)
3800000700000220002
665386
3800000700000230001
(11-99),(10-98)
3800000700000230002
3800000700000260001
3800000700000260002
(1-119),(2-102)
3800000700000270001
(121-215),(104-208)
3800000700000270002
(1-113),(2-88)
3800000700000380001
(115-219),(90-196)
3800000700000380002
(111-221),(110-200)
3800000700000690001
(1-109),(2-108)
3800000700000690002
3800000700000730001
(51-99),(56-98)
3800000700000730002
3800000700000820001
(21-101),(34-134)
3800000700000820002
(136-140)
3800000700000820003
665382
3800000700000890001
(89-299),(98-298)
3800000700000890002
(1-121),(2-132)
3800000700000950001
(123-161),(134-172)
3800000700000950002
3800000700000970001
(25-35),(26-74)
3800000700000970002
3800000700000980001
(45-71),(54-76)
3800000700000980002
(1-19),12
3800000700001140001
3800000700001140002
11,(13-99)
3800000700001180001
2,5,7,9,11,(8-98)
3800000700001180002
(1-85),(2-76)
3800000700001330001
(87-113),(78-108)
3800000700001330002
3800000700001440001
(33-63),(62-94)
3800000700001440002
3800000700001600001
(9-59),(18-82)
3800000700001600002
1,2,4,(7-33),(12-44)
3800000700001760001
3,5,6,8,10
3800000700001760002
(7-49),(2-22)
3800000700001800001
(51-63),(24-94)
3800000700001800002
(1-39),(2-52)
3800000700001950001
(41-55),(54-74)
3800000700001950002
(1-123),(2-96)
3800000700001310001
(125-235),(98-202)
3800000700001310002
3802400000100140001
666352
3842
25246551000
3802400000100140002
666351
3802400000100400001
7,9,11,13-999
3802400000100400002
(1-47),(2-34)
3802400000100450001
(49-999),(36-998)
3802400000100450002
3802400000100510001
3802400000100510002
3802400000100540001
(17-999),(6-998)
3802400000100540002
3802400000100560001
11,13,15-999
3802400000100560002
(108-208),(85-183)
1800000200001500001
(210-222),(185-193)
1800000200001500002
(1-83),(2-106)
1800000200001500003
1800000200001970001
(9-29),(2-26),30,34,(44-48),(54-64)
1800000200001970002
1800000200001660001
(32-40),(59-63)
1800000200001660003
1800000200001620001
(17-33),(38-50)
1800000200001620002
1800000200001630001
(124-128)
1800000200001630003
1800000200001780001
49,61,61 ,61¡,(60-122)
1800000200001780002
1800000200001870001
(19-21),(22-28)
1800000200001870002
(48-136),(144-148),(154-162)
1800000200001570003
1800000200001570001
(62-68),(65-67)
1800000200001660002
(41-87),(95-99),111,113
1800000200001570002
(41-69),77,(48-94),108,(112-120)
1800000200001630002
5200000200000770001
5200000200000770002
5200000200000080006
(1-31),(2-25),(27-70)
5203200100002610001
5203200100001670001
26,33
5203200100002610002
5203200100000840001
5203200100000840002
22 
5203200100002440001
(1-57),50,52 
5203200100002440003
5203200100002010002
15-19
5203200200000080002
(22-58),89â
5200000100004610004
(2-54),(1-89)
1400000100000790003
5000000700000130002
5000000700000140003
5000000700000140004
5000000700000140005
13,14,19
5000000700000080003
5900001100000220001
9-27
5900001100000750001
20-48
5900001100000830001
19-24
5900001100001850001
6-18
5900001100002090001
1-163
5900001100002530001
5900001100002590001
5900001100003160001
1,1,1,2,2
5900001100001130002
(2-38),(7-13),(51-61)
5900001100000120001
51,52,54
5900001100002690001
5900001100002740001
(4-16),(3-17)
5900001100002830001
5900001100003950001
5900000100010740001
5900000100010740002
614095
5900000100011150003
5900000100003050001
(2-998),(1-41),(45-999)
5900000100003050002
5900000100004690001
5900000100011450003
5900001200000250001
617763
5920
57435000000
41-100
5900001200000250002
617764
181-250
5900001200000730001
617761
1-180
5900001200000730002
617762
5900001200000240001
617760
48-70
5900001200000240002
(2-34),36/1,(1-61)
5900001200000090001
36,(38-100),(63-99)
5900001200000090002
5900001200000070001
5900001200000070002
5900001200000060001
5900001200000060002
(36-100)
5900001200000060003
(13-53)
5900001200000020001
(2-62),(55-63)
5900001200000020002
5900001200000860001
1,2,3,5,6,7,8,10-100
5900001200000860002
5900000100009540005
5900000100000040004
614990
5900000100000040005
6300000100002040006
(23-75)
6300000100002810007
6300000100003580008
7800000000002810003
(70-130)
0200100100002750006
0200100100008490005
0200100100005880006
0200100100004260006
0200100100004260007
(1-13),(101-301)
0200100100009600003
0200100100009600004
0200100100004630004
0200100100004630005
0200100100004630006
0200100100002170004
0200100100002570003
0200100100002570004
0200100100002570005
0200100100002570006
0201500100001180003
0201500100001140002
0201500100001140003
(15-57)
0201500100001140004
0200000500000380002
0200000500000380003
0200000500000380004
(56-100)
0200000500000380005
(39-101)
0200000500000380006
72-84
3500000200000150002
39-45
3500000200000230002
1,2,3
3500000200000230003
(15-47),(44-46)
3500000200000640001
3500000200000670001
3500000200000670002
162608
3500000200000940001
3500000200000940002
1-17,(36-68)
3500000200000150003
(43-51),(54-62)
3500000200000500002
3500000200001120004
32,34,34,36,38
3500000200000640002
3500000200000990004
162605
(22-100),(27-99)
3500000200001100002
40,42,50
3500000200001170003
3500000200002280001
14,18
3500000200002280002
(15-67),16,(20-46)
3500000200002280003
3500000200002410001
3500000200002410002
30,30
3500000200001230001
1-29,31-99
3500000200001230002
(93-135)
3500000200001520008
(41-81),(60-92)
3500000200001520009
3500000200001520010
3500000200001690001
3500000200001690002
135,141
3500000200001740001
26,34,34,36,41,43,45,47
3500000200001780004
2,4,4
3500000200001800004
3500000200001920001
97
3500000200001920002
1600000100004260001
1600000100004260002
(28-30),58,(66-68),(72-74)
1600000100009760004
1,1 ,3,5,7,7 ,7¡
1600000100012580001
1600000100012580002
7800000000018450001
7400000100004590003
7400000100000070003
454128
(90-134),(67-111)
7400000100004270004
(18-20),(17-29)
7400000100004270005
(8-40),(13-53)
7400000100004480003
7400000100006930001
(30-70),(31-97)
7400000100006930002
7400000100008710001
454036
(16-54),(1-55)
7400000100008710002
7400000100011010005
30-64
7400000900002050001
7400000902400130002
7400000902400130001
7400000902400070001
7400000902400070002
7400000100014210001
454015
2700000500004340001
(16-20),(5-9)
2700000500004340002
80-191
2700000500001410001
22-76
2700000500001410002
(21-71)
2700000500001830001
(70-106),(75-165),130
2700000500001830002
2700000500000050001
4-64
2700000500000050002
17-19
2700000500000620005
66,66/2
2700000500001790004
16-22
2700000500002220001
34-54
2700000500002220002
2700000500002360001
2700000500002360002
10-20,22-34
2700000500002360003
35-37,21,40-46
2700000500002360004
2700000500002390003
2700000500003270001
1-9,24-32
2700000500003270002
7601500100002520001
7601500100002520002
7601500100003620001
8-28
7601500100003620002
7601500100004860001
7601500100005460001
7601500100005460002
23-39,118,122-128
7601500100006960001
55-77
7601500100006960002
152908
1,9-50
7601500100000160002
2-21
7601500100001130001
152978
1,59-100
7601500100001130002
152917
1-2,4-100
7601500100000130001
7601500100000130002
1-7,9,11-100
7601500100007120001
7601500100007120002
152973
1,2,4,6-100
7601500100004860002
1-69,73
4701700100000800001
187555
4715
41460000000
141,143-200
4701700100000800003
70-72,74-140,142
4701700100000800002
5500000100002720001
5500000100002720002
5500000100004250006
26,(58-94),(17-75)
5500000100004250007
34,27
5500000100005050001
103,(113-117)
5500000100005050002
(30-34),(38-40),(44-68)
5500000100005430005
(87-123),13,13ª1
5500000100008410006
(4-6),1
5500000100011500005
5500000100011510004
5500000100011520004
(18-122),(49-101)
5500000100011520005
(2-78),(1-45)
5500000100013740001
80,(47-101)
5500000100013740002
71,71,71ª1,81,83
5500000100013960001
5500000100013960002
(6-166),(7-181)
5500000100014870001
(2-94),(51-83),35
5500000100008310003
52,56
5500000100003840003
(67-179),(62-144)
5600000100000330002
(181-331),(146-266)
5600000100000330003
460005
(39-57),(54-70)
5600000100000430002
(59-129),(72-156)
5600000100000430003
(23-27),(30-50)
5600000100020240001
5600000100020240004
(5-29),(2-28)
5600000100000520001
(39-105),(30-114)
5600000100000520002
(13-37),(34-48)
5600000100000590001
460026
(50-110)
5600000100000590003
5600000100000590004
460040
5600000100000650001
(17-71),(26-36)
5600000100000650002
(39-101),(24-96)
5600000100000690003
(103-153),(102-152)
5600000100000690004
5600000100000730001
(27-123),(48-156)
5600000100000730002
5600000100000750001
(21-55),(20-28)
5600000100000750003
(61-123),(66-150)
5600000100000780002
(125-127),(152-268),(133-227)
5600000100000780003
5600000100000780004
(177-253),(180-252)
5600000100000810003
5600000100000930001
(68-102)
5600000100000930003
5600000100000950001
5600000100003030001
5600000100003030002
(41-119),(4-60)
5600000100003030003
5600000100001080001
11,4,6,(10-16)
5600000100001080002
5600000100001130001
(33-131),(34-142)
5600000100001130002
(71-147),(58-154)
5600000100001200002
(149-225),(156-236)
5600000100001200003
(53-135),(66-126)
5600000100001320002
(137-249),(136-226)
5600000100001320003
128,130
5600000100001320004
5600000100001320005
(11-93)
5600000100001370004
(95-149),(26-30)
5600000100001370005
8,8
5600000100001370006
(31-51),(34-52)
5600000100001390001
(53-67),(54-72)
5600000100001390003
(57-75),(60-90)
5600000100001420002
(79-159),(92-208)
5600000100001420003
(55-137),(70-168)
5600000100008620002
(139-245),(170-274)
5600000100008620003
5600000100001490001
(47-119),(58-148)
5600000100001490002
(121-131)
5600000100001490003
(29-125),(40-64)
5600000100001550002
(127-185),(66-134)
5600000100001550003
(67-177),(50-160)
5600000100001590002
(179-253),(162-252)
5600000100001590003
(31-117),(32-122)
5600000100001610002
(119-167),(124-174)
5600000100001610003
(73-129),(92-166)
5600000100001630005
(131-141),(168-218)
5600000100001630006
(122-180)
5600000100001640003
(47-105),(182-232)
5600000100001640004
5600000100001770002
(9-11),(8-10)
5600000100001770003
(1-15),2
5600000100001820001
(17-99),(4-100)
5600000100001820002
5600000100001860002
(13-77),(14-102)
5600000100001860003
(79-137)
5600000100001860004
(114-136)
5600000100001860005
(1-55),(2-12)
5600000100001910001
5600000100001910002
(25-31),(2-30)
5600000100001930002
5600000100001930003
(51-89),(78-196)
5600000100001980007
(198-286)
5600000100001980008
5600000100002090001
(35-85)
5600000100002090003
(89-139),(10-54)
5600000100002090004
(1-55),(62-94)
5600000100002120001
59,(96-100)
5600000100002120003
(1-77),(2-118)
5600000100002150001
(79-101),(120-218)
5600000100002150002
(1-9),(10-18)
5600000100002210001
5600000100002300001
(21-65),(62-160)
5600000100002300002
(55-71),(55-88)
5600000100002370001
73,(90-104)
5600000100002370002
(65-85),(68-82)
5600000100002030002
(87-211),(84-204)
5600000100002030003
(41-115),(38-92)
5600000100002430003
(117-197),(94-176)
5600000100002430004
5600000100002450001
(51-113),(50-116)
5600000100002450002
(115-161),(72-124)
5600000100002470001
5600000100002470004
5600000100002540004
(10-44)
5600000100002540005
(15-119)
5600000100002540006
(48-128)
5600000100002540007
(121-193)
5600000100002540008
(57-145),(70-156)
5600000100002600002
(149-247),(158-234)
5600000100002600003
(251-257)
5600000100002600004
(236-250)
5600000100002600005
5600000100002660004
(96-136)
5600000100002660005
5600000100002680001
(61-83)
5600000100002680003
(57-153),(64-174)
5600000100002740002
(155-307),(176-336)
5600000100002740003
5600000100002760001
(39-101),(48-110)
5600000100002760002
(57-155),(60-158)
5600000100002780002
(157-255),(160-270)
5600000100002780003
(1-39),(2-12)
5600000100002800001
(41-89),(14-34)
5600000100002800003
5600000100002970001
(25-85),(28-88)
5600000100002970002
(59-147)
5600000100002940006
(149-229)
5600000100002940007
(231-243)
5600000100002940008
(249-251)
5600000100002940009
(253-259),(40-50)
5600000100002940010
(11-19),(6-12),2,3,5,5 ,20,22
3400000100027300003
1800000200000670003
(27-51),(55-61)
1800000200000870003
(17-23),35 ,41,(47-55),(65-75)
1800000200001230003
1800000200000040001
(1-23),(4-22)
1800000200000040002
(109-129)
1800000200000650004
(36-44),21 ,(23-37)
1800000200001820001
(1-21),(4-32)
1800000200001820002
52,52 ,52¡,52£,52§
1800000200000170003
(66-70)
1800000200001970003
(90-108)
1800000200000640004
(270-288)
1801100100000190001
1801100100000190002
281,283
1801100100000540003
(1-45),(2-44),46 
1801100100000220001
(47-55),(46-54)
1801100100000220002
(1-177),(2-152)
1801100100000440001
(154-158),(179-209)
1801100100000440002
(1-21),2,2 ,2¡,4 ,(6-10)
1801100100000490001
1801100100000490002
2,3,4,5,6,7,8,9,10,11
1801100100000620003
1801100100000160001
37,39
1801100100000160002
(1-19),14,18
1801100100000400001
1801100100000400002
13,(22-32)
1801100100000120001
1801100100000120002
17,19-26
1801100100000100001
1801100100000100002
152,164,166,174,178,(194-198)
1800000100000670005
(140-150)
1800000100000670006
(125-181)
1800000200000020002
(126-130)
2500001100003100005
5400000100018460001
1,(7-999),(2-998)
5400000100018460002
(204-234)
7400000100007560003
(288-324)
7400000100007560004
(326-348)
7400000100007560005
(350-400)
7400000100007560006
1900200000100530001
1900200000600150001
1900200001100040001
1900200001100050001
1900200001600410001
(100-998),(49-999)
5502100008300090001
644520
52244849001
5500000100008420001
5500000100008420002
3300800100001070004
139
1800000100005010012
286,288
1800000100005010013
257,259
1800000100005010014
29,6-27
1800000100002460004
7-25
1800000100003510003
1800000100003510004
45-60,35
1800000100004260005
(310-424),(285-293)
1800000100002610007
(432-446)
1800000100002610008
(104-132),(105-109),17
1800000100001710007
(32-34),(43-69)
3200000100003250006
29
4500000100000730003
(142-160),(103-127)
5500000100000860003
(31-99),(32-72)
2700000100004070001
(105-147),(74-92),72,101
2700000100004070020
(195-999)
2700000100004070023
1,2,8
2700000100014400001
(10-998),(15-999)
2700000100014400002
2700000100008490001
(80-98),73,75,95,135
2700000100008490002
(1-7),6
2700000100009140001
(13-999),(10-999)
2700000100009140002
99-117
2700000100000690002
(1-13),(58-92),8,23,25,27,29,29
2700000100008300001
2700000100012170001
(17-19),24
2700000100000340001
2700000100004370001
3,5,5,5,
2700000100001040001
2700000100002630001
(1-19),(2-14),39
2700000100002890001
1,2,2,2,2,2
2700000100006500001
2700000100004240001
2700000100000340003
1,1,7,8
2700000100011090001
3400000200000070001
404130
3435
18410000000
(65-85),(54-64)
3400000200000070002
404122
3400000200000010001
404132
3400000200000010002
404133
(52-90)
3400000200000010003
404118
(65-87)
3400000200000010004
404109
3400000200000030001
(37-91)
3400000200000030002
3400000200000080001
404127
3400000200000080002
404105
(17-43)
3400000200000080003
404126
3400000200000080004
404131
3400000200000120001
(3-37),(72-94)
3400000200000120002
3400000200000130001
404102
(15-47),(16-40)
3400000200000130002
(49-85)
3400000200000130003
(87-109),(50-72)
3400000200000130004
3400000200000130005
(76-102),74
3400000200000130006
3400000200000170001
404110
(12-44)
3400000200000170002
404111
(5-43),45
3400000200000170003
404121
3400000200000170004
3400000200000170005
404120
(61-95)
3400000200000170006
(103-127)
3400000200000170007
(129-155),(138-160)
3400000200000170008
3400000200000200001
3400000200000200003
3400000200000250001
(53-71),(44-68)
3400000200000250002
(75-95),(70-86)
3400000200000250003
(361-385)
3400000200000250005
(1-61),(2-24)
3400000200000280001
(63-73),(26-46)
3400000200000280002
(1-27),(8-10),4
3400000200000290001
13,13,(29-39)
3400000200000290002
3400000200000310001
404104
3400000200000310002
404125
(33-51)
3400000200000310003
3400000200000310004
3400000200000310005
(54-84)
3400000200000310006
(53-91)
3400000200000310007
3400000200000310008
3400000200000310009
(111-125),(112-142)
3400000200000310010
3400000200000320001
3400000200000320002
(36-46)
3400000200000320003
3400000200000040001
(49-55),8
3400000200000040002
(57-83)
3400000200000040003
3400000200000050001
3400000200000050002
3400000200000050003
3400000200000340001
3400000200000340002
(22-42)
3400000200000340003
(44-86)
3400000200000340004
3400000200000350001
3400000200000350002
3400000200000350003
(37-49),(20-48)
3400000200000350004
3400000200000370001
3400000200000370002
3400000200000370003
(66-104)
3400000200000370004
(106-116)
3400000200000370005
(118-134)
3400000200000370006
(136-150)
3400000200000370007
(152-164)
3400000200000370008
(170-186)
3400000200000370009
(194-208)
3400000200000370010
404101
3400000200000390001
3400000200000390002
3400000200000850001
(23-85),(12-42),82
3400000200000850002
3400000200000420001
3400000200000420002
3400000200000460001
3400000200000460002
(33-55),(24-42)
3400000200000460003
98,110,(126-146),160,(97-135)
3400000200000250006
24,26
1600000100020070003
(22-258),(23-241)
1801100100000190003
7800000000001820007
7400000900001370015
7400000900000740003
(72-90)
7400000900001850011
77,83,(87-99)
7400000100004480004
(122-124)
7400000100003830003
7400000100006840001
(2-14),(18-998),(1-999)
7400000100003370001
(2-4),(6-998),(1-999)
7400000100002520001
46/33,(35-51)
1600000100016500007
29,31
1600000100016500008
1600000100020070004
5600000100020030002
5600000100020030001
(13-31),(8-30)
5600000100010230001
5600000100020510001
(36-38)
5600000100010560001
5600000100010560002
(2-4),(1-3),8,8,19,21
5600000100010660001
(20-30)
5600000100002940011
4200000300001130001
652422
4250
32410000000
24-60
4200000300001130002
652423
4200000300001810001
652420
22-64
4200000300001810002
652425
4200000300000490001
22-62
4200000300000490002
7200900100000080001
7200900100000300001
7200900100000080002
(1-119)
7200900100000310001
627145
(116-998)
7200900100000310002
7200900100000310003
7200900100000310004
7200900100000300002
7200900100000300003
7200900100001500002
70,72-74
7200900100001500001
(2-174)
7200900001800010001
627110
71222830001
(1-141)
7200900001800010002
7200900001800030001
7200900001800030002
(176-180)
7200900001800010003
(143-153)
7200900001800010004
627111
7200900001800030003
7200900001800030004
7200000100002680003
(97-113),129/1,131,131/1,136
7200000100003080005
(73-81),87
7200000100002150003
21
7200000100002340010
30
7200000100002340011
215-217
7200000100002410007
7200000100002430004
15,(27-51),(26-38)
7200000100000360003
35 
7200000100000380005
7200000100000860003
7200000100002690003
6ª3
7200000100002690004
7200000100003210003
156
7200000100003620003
(116-130)
7200000100003640003
7200000100003790003
7200000100003910003
7200000100003910004
7200000100004170004
7200000100004180004
5 
7200000100004330004
70,74,76,70/1
7200000100004370005
7200000100004460003
7200000100004590003
87,89
7200000100004630005
(87-225)
7200000100004800003
127,113-125
7200000100005320003
(1-21),234
1801800100001510001
1801800100002740001
(5-53),(8-74)
1801800100000800003
(1-33),(2-32),(35-115),(34-108)
1801800100001850001
(1-11),(2-22)
1801800100002060001
1801800100002470001
(1-27),(2-34),(31-107),(36-120)
1801800100002760001
(2-38),(3-15),(19-27)
1801800100000090001
1801800100001630001
(31-75),(58-108)
1801800100000430003
1801800100002380001
(36-54),(23-123)
1801800100001500001
(86-152),(53-127)
1801800100002740002
1801800100000210001
427794
(1-95),(2-104)
1801800100000340001
1801800100001230001
(1-121),(2-120)
1801800100001220001
1801800100000520001
(1-127),(2-134)
1801800100000510001
1801800100000630001
(6-48),(35-89)
1801800100000720001
(91-135),(50-100)
1801800100000720002
1801800100000960001
1801800100001020001
(1-97),(2-116)
1801800100000820001
2-10,12
1801800100001310001
(1-53),(2-46)
1801800100001700001
1801800100001720001
1801800100001930001
(1-65),(2-72)
1801800100002150001
(1-79),(83-111),(2-47)
1801800100002600001
1801800100002730001
2-44
1801800100000950001
(4-60),(5-31)
1801800100000160001
(2-20),(7-15)
1801800100000150001
1801800100000920001
(1-5),(2-60)
1801800100001060001
1801800100001070001
(1-53),(2-26)
1801800100001170001
(10-58),(11-79)
1801800100001430001
1801800100000800001
6600000100005930001
620028
6600000100005930002
620131
(37-999),(36-998)
6600000100005930003
620043
(59-999),(46-998)
6600000100000340003
620130
(1-73),(2-8),(20-40)
6600000100000370001
6600000100000370002
6673
65401385000
6600000100000490003
(1-99),(2-74)
6600000100000750001
(101-999),(76-998)
6600000100000750002
620016
6600000100000790001
620109
(140-998)
6600000100000790002
(29-57),(4-44)
6600000100000340004
(145-999),(134-998)
6600000100001070003
6600000100001080001
6600000100001080002
620089
6600000100001110001
620088
(29-127),(24-102)
6600000100001110002
620042
(129-999),(104-998)
6600000100001110003
620098
6600000100001280002
620057
6600000100001330005
(49-87),(36-92)
6600000100001330006
6600000100001330007
(143-159)
6600000100001330008
(246-998)
6600000100001330009
(180-232)
6600000100001330010
6600000100001500001
620041
6600000100001500002
620062
(29-999),(12-998)
6600000100001500003
620137
(45-89)
6600000100001600003
(91-103),(107-999),(82-998)
6600000100001600004
6600000100001600005
620094
6600000100001640001
620097
6600000100001640002
620010
(1-7),2,6
6600000100001840003
6600000100001840004
620022
6600000100001960001
(81-999),(78-998)
6600000100001960002
6600000100002030003
6600000100002030004
6600000100002100001
(33-45),(24-48)
6600000100002100002
6600000100002100003
6600000100002260001
620135
(37-999),(68-998)
6600000100002260002
(1-999),(2-20),(24-998)
6600000100002270001
6600000100002270002
620021
6600000100002400001
(1-999),(108-998)
6600000100002400002
6600000100002410004
6600000100002410005
(7-999),(158-998)
6600000100002410006
(82-156)
6600000100002410007
6600000100002410008
(9-37),(10-50)
6600000100000180004
(39-129)
6600000100000180005
(159-183),(204-208)
6600000100000180006
(185-999),(210-998)
6600000100000180007
620085
(143-157)
6600000100000180008
(52-150)
6600000100000180009
(152-202)
6600000100000180010
6600000100002600001
(29-39),(2-22)
6600000100002600002
(41-999),(24-998)
6600000100002600003
6600000100002630001
(1-999),(66-90)
6600000100002630002
620103
(3-999),(2-998)
6600000100002700001
6600000100002700002
620095
6600000100002770001
6600000100002770002
(27-63),(2-30)
6600000100002850003
(65-999),(32-998)
6600000100002850004
6600000100002860004
6600000100002910001
6600000100002910002
6600000100002930001
(149-999),(132-998)
6600000100002930002
6600000100003180003
(7-57),(8-34)
6600000100003180004
(65-81),(36-54)
6600000100003180005
6600000100003180006
620001
(85-999),(56-998)
6600000100003180007
6600000100003280001
(57-999),(2-998)
6600000100003280002
6600000100003680001
(15-49)
6600000100003680002
(32-46)
6600000100003680003
(51-999),(48-998)
6600000100003680004
(1-999),(2-18)
6600000100003930001
6600000100003930002
(1-57),(2-998)
6600000100004140001
620012
(59-69)
6600000100004140002
6600000100004140003
6600000100004150001
(57-999),(62-998)
6600000100004150002
6600000100004160001
6600000100004160002
6600000100004400001
6600000100004400002
(1-999),(2-50),(54-998)
6600000100004580001
620007
6600000100004580002
620084
6600000100004690001
6600000100004690002
(1-15),(2-42)
6600000100013610001
44,46,(72-998)
6600000100013610002
(17-999),(48-70)
6600000100013610003
6600000100004880001
6600000100004880002
(1-65),(2-36)
6600000100004900001
(67-999),(38-998)
6600000100004900002
6600000100004910001
620049
6600000100004910002
(1-79),(2-998)
6600000100005050001
6600000100005050002
6600000100005060003
(25-53),(16-64)
6600000100005060004
(55-73),(66-76)
6600000100005060005
6600000100005150001
620017
6600000100005150002
19,(2-60)
6600000100005220001
6600000100005220002
(43-75),(77-999),(98-998)
6600000100005220003
(62-96)
6600000100005220004
6600000100005430001
(61-999),(64-998)
6600000100005430002
6600000100005510001
6600000100005510002
6600000100005530001
6600000100005530002
(1-35),(2-72)
6600000100005350001
(37-999),(74-998)
6600000100005350002
6600000100005370001
6600000100005370002
(1-59),(2-56)
6600000100005590001
(61-999),(58-998)
6600000100005590002
6600000100005620001
6600000100005620002
(1-57),(2-34)
6600000100005780003
6600000100005780004
(71-133),(40-74),78
6600000100005780005
6600000100005780006
(135-999),(80-998),76 
6600000100005780007
6600000100005810001
(5-19),(10-32)
6600000100005810002
6600000100005810003
620039
(1-13),(19-33)
6600000100006050005
6600000100006050006
6600000100006050007
(30-38)
6600000100006050008
(35-49),(53-83)
6600000100006050009
6600000100006050010
620083
(85-103),(60-72)
6600000100006050011
6600000100006230001
(73-999),(32-998)
6600000100006230002
(1-73),(2-38)
6600000100006280001
(75-999),(40-998)
6600000100006280002
6600000100006290001
6600000100006290002
(133-171),(136-184)
6600000100006330004
(173-217),(186-998)
6600000100006330005
(219-999)
6600000100006330006
134ª
6600000100006330007
620110
6600000100006370001
6600000100006370002
6600000100006430001
(11-999),(20-998)
6600000100006430002
(7-31),(6-54)
6600000100006480005
(33-45),(56-68)
6600000100006480006
6600000100006480007
(122-160),117
6600000100006480008
(103-115)
6600000100006480009
(121-145)
6600000100006480010
(141-185),(102-110)
6600000100006490004
(187-999),(112-998)
6600000100006490005
(27-35),(20-36)
6600000100006660003
6600000100006660004
6600000100006670001
(31-999),(6-998)
6600000100006670002
6600000100006740001
6600000100006740002
6600000100006780001
6600000100006780002
6600000100006820001
6600000100006820002
6600000100006850001
6600000100006850002
6600000100006850003
620002
6600000100006850004
(25-999),(32-998)
6600000100006850005
(57-115),(76-124)
6600000100006860003
(171-999),(210-998)
6600000100006860004
(126-208)
6600000100006860005
6600000100007020003
(36-84)
6600000100007020004
6600000100007020005
(87-93),(97-123),(127-141),118
6600000100007020006
(143-999),85,95 ,125 
6600000100007020007
(120-998)
6600000100007020008
6600000100007060001
620023
(13-999),(22-998)
6600000100007060002
620076
6600000100007110001
6600000100007110002
6600000100007140001
620050
6600000100007140002
(1-91),(2-64)
6600000100007160001
(93-999),(66-998)
6600000100007160002
(63-103),(52-62)
6600000100007170003
(105-999),(64-998)
6600000100007170004
6600000100007210001
6600000100007210002
6600000100007660001
6600000100007660002
6600000100007680001
(41-999),(40-998)
6600000100007680002
6600000100007730001
6600000100007730002
6600000100007730003
(1-15),(19-31),(2-36)
6600000100007870001
17,(33-999),(38-998)
6600000100007870002
(1-9),(4-12)
6600000100007880001
6600000100007880002
(1-83),(2-44)
6600000100008010001
(85-999),(46-998)
6600000100008010002
6600000100008050001
(65-79),(64-88),83
6600000100008050002
81
6600000100008050003
(85-999),(90-998)
6600000100008050004
6600000100008290001
(15-45),(14-38)
6600000100008290002
(47-999),(40-998)
6600000100008290003
(1-41),(2-14)
6600000100008310001
(43-999),(16-998)
6600000100008310002
(1-37),(2-56)
6600000100008600001
(39-999),(58-82)
6600000100008600002
6600000100008600003
620024
6600000100009070001
(9-43),(14-48)
6600000100009070002
6600000100009070003
(36-58),(62-998)
6600000100009090003
(51-999),60
6600000100009090004
6600000100009290001
6600000100009290002
4,4 
6600000100009290003
620019
6600000100009290004
6600000100009290005
(23-999),(40-998)
6600000100009290006
6600000100009400003
(39-999),(52-998)
6600000100009400004
6600000100009400005
6600000100009400006
(43-125),(44-110)
6600000100009680003
(127-999),(112-998)
6600000100009680004
6600000100009730001
6600000100009730002
6600000100009950001
(64-998)
6600000100009950002
6600000100009980003
6600000100009980004
(1-29),(39-57),(2-34)
6600000100010030001
6600000100010030002
620032
(63-85),(89-999),82,86
6600000100010030003
620030
87,87 
6600000100010030004
620072
6600000100010140001
6600000100010140002
6600000100010270001
(41-999),(34-998)
6600000100010270002
6600000100010530001
6600000100010530002
6600000100010660001
6600000100010660002
6600000100010670001
(35-999),(44-998)
6600000100010670002
(83-97),(110-118)
6600000100010680003
(99-999),(120-998)
6600000100010680004
6600000100010770001
(13-43),(26-58)
6600000100010770002
(45-999),(60-998)
6600000100010770003
6600000100010920001
6600000100010920002
(1-35),(14-32)
6600000100011000001
6600000100011000002
6600000100011000003
77,123 ,125
6600000100011020001
(1-75),(79-121),(127-999),(2-998)
6600000100011020002
(1-39),(2-14)
6600000100011050003
(41-69),(16-54)
6600000100011050004
6600000100011240001
(27-999),(38-998)
6600000100011240002
6600000100011310001
(7-43),(10-52)
6600000100011310002
6600000100011310003
(1-87),(2-998)
6600000100011710001
(89-999)
6600000100011710002
6600000100011700001
(49-999),(50-998)
6600000100011700002
(11-27),(29-99),(16-36),(42-998)
6600000100012990003
6600000100012990004
6600000100011920001
6600000100011920002
6600000100012000001
(45-999),(32-998)
6600000100012000002
6600000100012030001
(49-999),(58-998)
6600000100012030002
6600000100012040001
(55-123),(127-999),(58-998)
6600000100012040002
6600000100012040003
(1-77),(2-84)
6600000100012050001
(79-999),(86-998)
6600000100012050002
(1-999),(2-90)
6600000100012180001
(92-998)
6600000100012180002
(27-57),(16-54)
6600000100012290004
(59-73),(56-80)
6600000100012290005
(61-75),(46-62)
6600000100012310003
(77-999),(64-998)
6600000100012310004
(65-75),(62-72)
6600000100012320003
(77-999),(74-998)
6600000100012320004
(13-999),(58-998),9,11 ,11¡
6600000100012360003
6600000100012360004
620013
6600000100012490001
6600000100012490002
1,(5-125),(2-124)
6600000100012550001
6600000100012550002
(127-999),(126-998)
6600000100012550003
(1-71),(75-81),(2-80)
6600000100012680003
73,83
6600000100012680004
6600000100012730003
6600000100012730004
(35-93),(20-94)
6600000100012750003
6600000100012750004
6600000100012780001
2 ,(5-41)
6600000100012780002
(4-94)
6600000100012780003
(43-999),(96-998)
6600000100012780004
6600000100012830001
6600000100012830002
(1-79),(2-50)
6600000100012860001
(81-999),(52-998)
6600000100012860002
6600000100012940001
139,141,145
6600000100012940002
620108
1,(7-137),143,(147-999),(2-998)
6600000100012940003
6600000100012950004
(109-999),(90-998)
6600000100012950005
(77-107)
6600000100012950006
(29-75)
6600000100012950007
6600000100013020001
(43-999),(38-998)
6600000100013020002
6600000100013030001
6600000100013030002
(110-998)
6600000100013200004
6600000100000070003
6600000100000070004
6600000100000110001
(15-29),(16-40)
6600000100000110002
(31-81),(42-100)
6600000100000110003
(83-999),(102-998)
6600000100000110004
(69-111)
1800000100002840003
426073
57,77
1800000100000670007
41,57
4200001200012310001
654084
4200001200012310002
15,17-30
4200000700200040001
652830
32434000001
4200000700200940001
3,85 
4200000900011860001
4200000900011860002
7400000100014230001
(1-157)
7400000100021120001
454904
7400000100021120002
7400000100021280001
7400000100021280002
7400000100003020001
3400000100003540001
(41-63),(14-34),(52-64),93,95,95 
3400000100003540002
3400000100018070001
17,19,24,26 ,29,30
3400000100018070002
(135-147),(124-148)
3400000100013000002
(57-59),(50-58)
3400000100014210003
(163-249),(134-200),132 
3400000100013810002
(75-161),(66-132)
3400000100013810003
(3-71),(4-64)
3400000100013810004
(117-181),(120-184)
3400000100014420006
3400000100025000001
3400000100025000002
0100000100000470001
385011
0105
79401000000
(17-27),(10-20)
0100000100000470002
385018
0100000100000460001
0100000100000460002
0100000100000500001
385017
0100000100000500002
(42-52)
0100000100000500003
385012
0100000100000510001
0100000100000510002
0100000100000490001
385009
0100000100000490002
385007
0100000100000340001
(13-153),(20-162)
0100000100000340002
385000
(155-999),(164-998)
0100000100000340003
385006
(1-113),(2-76)
0100000100000350001
385002
(80-82)
0100000100000350002
385008
0100000100000360001
0100000100003000001
(1-105),(2-110)
0100000100000370001
(107-999),(112-998)
0100000100000370002
0100000100000380001
0100000100003010001
(1-45),(2-74)
0100000100000400001
(47-161),(76-194)
0100000100000400002
(163-297),(196-274)
0100000100000400003
385020
(299-375),(276-376)
0100000100000400004
(1-119),(2-94)
0100000100000410001
(121-303),(96-278)
0100000100000410002
(305-337),(280-298)
0100000100000410003
385001
0100000100000520001
385019
(1-149),(94-172)
0100000100000520002
(151-241)
0100000100000520003
385016
0100000100000530001
(55-999),(66-998)
0100000100000530002
(1-61),(4-100)
0100000100000550001
(63-257),(102-170)
0100000100000550002
(172-308)
0100000100000550003
(1-21),(2-44)
0100000100000570001
0100000100000570002
0100000100000050001
0100000100000050002
(3-67),(2-78)
0100000100000120001
(1-85),(2-84)
0100000100000090001
2,(1-135)
0100000100000130001
(137-141),(12-24)
0100000100000130004
(1-127),(2-140)
0100000100000210001
(129-245),(142-240)
0100000100000210002
0100000100000240001
(71-133),(70-130)
0100000100000240002
(135-329),(132-296)
0100000100000240003
(331-513),(298-532)
0100000100000240004
0100000100000310001
(105-181),(138-218)
0100000100000310002
(183-315),(220-302)
0100000100000310003
0100000100000320001
(5-67),(6-70)
0100000100000320002
(1-119),(2-112)
0100000100000300001
(121-215),(114-128)
0100000100000300002
0100000100000220001
0100000100000950001
0100000100000970001
(69-131),(66-120)
0100000100000970002
(133-295),(122-330)
0100000100000970003
(297-527),(332-542)
0100000100000970004
(544-550)
0100000100000970005
0100000100000980001
0100000100001000001
(53-187),(50-184)
0100000100001000002
(5-19),(2-86)
0100000100001030001
(21-195),(88-278)
0100000100001030002
(280-298)
0100000100001030003
(197-999),(300-998)
0100000100001030004
(1-61),(2-112)
0100000100001050001
(63-125),(114-214)
0100000100001050002
(127-309),(216-412)
0100000100001050003
(311-451),(414-660)
0100000100001050004
(706-998)
0100000100001050005
(1-91),(2-88)
0100000100001100001
(93-999),(90-988)
0100000100001100002
0100000100001110001
0100000100001110002
(121-183),(86-144)
0100000100001110003
0100000100001140001
(31-65),(14-52)
0100000100001140002
(1-169),(2-160)
0100000100001180001
(171-229),(162-214)
0100000100001180002
(1-55),(2-80)
0100000100002800001
(82-174)
0100000100002800002
(57-147)
0100000100002800003
(1-113),(2-122)
0100000100002830001
(115-147),(124-126)
0100000100002830002
(128-152)
0100000100002830003
0100000100002890001
(21-29),(32-36)
0100000100002890002
0100000100000630001
(1-183),(2-32)
0100000100002780001
0100000100002780002
(114-190)
0100000100002780003
(185-293)
0100000100002780004
(295-445),(192-350)
0100000100002780005
0100000100000700001
(75-191),(70-160)
0100000100000700002
(1-157),(2-176)
0100000100000690001
(159-331),(178-384)
0100000100000690002
(333-523),(386-594)
0100000100000690003
0100000100002990001
0100000100000730001
(35-119),(44-130)
0100000100000730002
0100000100000800001
(55-139),(60-148)
0100000100000800002
(141-261),(150-234)
0100000100000800003
0100000100000830001
(119-219),(148-274)
0100000100000830002
(221-251),(278-316)
0100000100000830003
(9-13),(2-38)
0100000100000820001
(29-151),(40-180)
0100000100000820002
0100000100000880001
(49-205),(42-152)
0100000100000880002
0100000100000930001
0100000100000930002
0100000100000930003
0100000100000960001
0100000100000960002
(1-131),(84-160)
0100000100001680001
0100000100001680002
(133-229),(162-334)
0100000100001680003
(285-373)
0100000100001680004
(231-283),(336-514)
0100000100001680005
(379-415)
0100000100001680006
(516-520)
0100000100001680007
(1-171),(2-136)
0100000100001700001
(173-269),(138-286)
0100000100001700002
(1-135),(2-116)
0100000100001710001
(137-999),(118-998)
0100000100001710002
(1-129),(2-124)
0100000100001720001
(131-215),(126-204)
0100000100001720002
(217-321),(206-320)
0100000100001720003
(323-393),(322-394)
0100000100001720004
0100000100001760001
(33-53),(36-66)
0100000100001760002
0100000100001790001
(39-179),(2-96)
0100000100001790002
(1-153),(2-112)
0100000100001800001
(155-261),(114-140)
0100000100001800002
(263-419),(142-290)
0100000100001800003
0100000100001860001
(1-77),(2-98)
0100000100001840001
(79-131),(100-154)
0100000100001840002
(133-267),(156-300)
0100000100001840003
(269-467),(302-466)
0100000100001840004
(1-61),(2-46)
0100000100001910001
(63-267),(48-238)
0100000100001910002
(269-359),(240-314)
0100000100001910003
0100000100001940001
(45-171)
0100000100001940002
(2-192)
0100000100001940003
(173-203),(194-308)
0100000100001940004
(205-305),(310-390)
0100000100001940005
(1-63),(2-146)
0100000100001300001
(65-127)
0100000100001300002
(2-210)
0100000100001380001
(212-442)
0100000100001380002
(444-638)
0100000100001380003
0100000100001380004
(91-169)
0100000100001380005
(171-357)
0100000100001380006
(359-553)
0100000100001380007
(555-589)
0100000100001380008
0100000100001560001
(87-127),(90-134)
0100000100001560002
(1-105),(2-94)
0100000100001610001
(107-203),(96-194)
0100000100001610002
(205-329),(196-326)
0100000100001610003
(1-141),(2-156)
0100000100001620001
(143-247),(158-252)
0100000100001620002
(249-269),(254-290)
0100000100001620003
(1-173),(2-192)
0100000100002450001
(175-337),(194-376)
0100000100002450002
(339-539),(378-634)
0100000100002450003
(636-640)
0100000100002450004
385021
(642-648)
0100000100002450005
(1-61),(2-66)
0100000100002550001
63,(72-78)
0100000100002550002
(73-79),(80-86)
0100000100002550003
0100000100002580001
(53-143),(42-116)
0100000100002580002
0100000100002610001
(69-157),(62-164)
0100000100002610002
(159-247),(166-268)
0100000100002610003
(249-383),(270-388)
0100000100002610004
0100000100002620001
(55-259)
0100000100002620002
(78-292)
0100000100002620003
(261-301),(294-346)
0100000100002620004
0100000100002630001
0100000100002630002
(74-128)
0100000100002630003
2¡,2¢
0100000100002700001
0100000100002700003
7,(22-24)
0100000100002700004
(1-179),(2-164)
0100000100002820001
(181-265),(166-222)
0100000100002820002
(267-411),(224-298)
0100000100002820003
0100000100002050001
(11-74),(2-40)
0100000100002050002
(1-87),(2-80)
0100000100002140001
(89-191),(82-174)
0100000100002140002
(193-307),(176-270)
0100000100002140003
(309-419),(272-394)
0100000100002140004
(1-141),(2-124)
0100000100002190001
(143-241),(126-196)
0100000100002190002
(1-83),(2-58)
0100000100002270001
(85-247),(60-164)
0100000100002270002
0100000100002330001
(77-151),(58-140)
0100000100002330002
(153-263),(142-234)
0100000100002330003
0100000100002360001
0100000100002380001
(45-239),(56-262)
0100000100002380002
(241-311),(264-346)
0100000100002380003
0100000100002390001
0100000100002390002
(75-153),(114-184)
0100000100002390003
(155-271),(186-292)
0100000100002390004
(273-341),(294-380)
0100000100002390005
3800001200000400003
5900000100002240003
(322-326),330,(346-366)
5900000100005460015
3201000002300010001
242514
3214
15224848002
3201000014500080001
242510
15224808001
3201000014500010001
3201000014500030001
3201000014500020001
3201000014500040001
3201000014500060001
3201000014500070001
3201000014500050001
13,18,28,29,31,32
3201000004400010001
15224808006
3201000002200030001
242511
15224808003
3201000002200050001
3201000002200010001
3201000002200040001
3201000002200020001
1,2,10,17,15,27
3201000005800010001
15224808007
2,6,16,19,23,26,31,33,35,43,45,49,53,59
3201000005800020001
8,11
3201000004300010001
15224808005
3201000000400010001
15224808002
3201000014300010001
242516
15224848006
3201000007600010001
15224848003
(2-26),(1-51)
3201000011400040001
15224848005
3201000007700010001
15224848004
3201000007700020001
3201000007700030001
3201000011600010001
15224848001
3201000011600020001
3201000011600030001
3201000011600040001
3201000011600050001
3201000011600060001
3201000011600070001
3201000013400010001
242520
15224852001
1-142
3201000013400020001
3201000013400050001
3201000013400040001
3201000013400030001
3201000013400060001
3201000008900020001
242517
15224852004
3201000008900010001
3201000013400070001
3201000006500010001
15224852002
3201000007300010001
15224852003
3201000006700010001
15224852005
44-78
3201000006700020001
79-90
3201000006700030001
3201000010000010001
15224852007
(102-264),(91-263)
3200000100000430001
241023
1600000100003370003
3800001300002380001
666780
3818
25440000000
5601800005400010001
461668
5645
53243834003
5601800005400020001
5601800005400030001
5601800005400040001
5601800005400050001
5601800005400060001
5601800005400070001
5601800005400080001
5601800005400090001
5601800004500010001
461669
53243834001
5601800004500020001
5601800004500030001
5601800004500040001
5601800004500050001
5601800004500060001
5601800004500070001
5601800004500080001
462669
0200100100011510001
5-8,12-13
0200100100011510002
(50-100),(51-121)
4303100100000840001
(2-48),(1-49)
4303100100000840002
(102-150),(123-215)
4303100100000840003
613152
5-99
4303100100000530001
1 ,1ä,1,2-4
4303100100000530002
1,1ä,2 ,3,4,7-29
4303100100000300003
1,3,5,5ä,(2-12)
4303100100000740001
13-99
4303100100000740002
4303100100000230001
(30-100),(23-99)
4303100100000230002
3401100100001860001
3401100100003010001
3401100100005040001
(5-7),4,8,10,12,12
3401100100001410001
3401100100002830001
17
3401100100002820004
403880
3400000100013860001
(9-49),(14-90)
3400000100013860002
(1-27),(6-26)
3400000100015140001
(29-35),(30-48)
3400000100015140002
3400000100014650001
3400000100014650002
3400000100015030001
400020
(49-133),(14-114)
3400000100015030002
(135-161),(116-142)
3400000100015030003
(1-97),(4-86)
3400000100014590001
(99-125),(88-142)
3400000100014590002
3402800200000570001
404160
3428
18251507000
(1-129)
3402800200000570002
404161
(122-140)
3401800100000470001
403345
(89-103)
3401800100000470002
3401800100000470003
403348
3401800100000470004
(140-166)
3401800100000580001
3401800100000580002
3401800100000580003
403346
3401800100000580004
3401800100000670001
3401800100000670002
3401800100000700001
3401800100000700002
3401800100000700003
(75-89)
3401800100001020001
(96-174)
3401800100001020002
(105-133)
3401800100001020003
3401800100001020004
3401800100001020005
3401800100000010001
(55-65)
3401800100000010002
(3-43),(4-38)
3401800100000270001
3403200100000030001
403531
3439
18428000000
3403200100000030002
3403200100000020001
3403200100000020002
3403200100000110001
3403200100000110002
3403200100000140001
3403200100000140002
3403200100001550001
3403200100001550002
3403200100000250001
3403200100000250002
3403200100000350001
3403200100000350002
3403200100000330001
3403200100000330002
3403200100000410001
3403200100000410002
3403200100000580001
(45-53)
3403200100001560001
3403200100001560002
3403200100000870001
3403200100000870002
3403200100001000001
3403200100001090001
3403200100001120001
3403200100001120002
3403200100001140001
(74-78)
3403200100001140002
3403200100001290001
3403200100001290002
3403200100001570001
3403200100001570002
3403200100001330001
(56-84)
3403200100001330002
3403200100001380001
3403200100001380002
3403200100001420001
3403200100001420002
3403200100001370001
(32-64)
3403200100001370002
3403200100000510001
3403200100000510002
3403200100000040002
403532
3403200100000040001
3403200100000060001
3403200100000060002
3403200100000050001
3403200100000050002
3403200100000100001
3403200100000100002
3403200100000170001
3403200100000170002
3403200100000210001
3403200100000210002
3403200100000350003
3403200100000350004
3403200100000370001
3403200100000370002
3403200100000500001
3403200100000500002
3403200100000400001
3403200100000400002
3403200100000490001
3403200100000490002
3403200100000480001
3403200100000670001
3403200100000670002
3403200100000630001
3403200100000630002
3403200100000590002
3403200100000690001
3403200100000690002
3403200100001580001
3403200100001580002
3403200100000880001
3403200100000900001
3403200100000900002
3403200100001020001
3403200100001020002
3403200100000910001
3403200100000910002
3403200100000980001
3403200100000980002
3403200100000960001
3403200100000960002
3403200100001050001
3403200100001050002
3403200100001140003
3403200100001140004
(1-101)
3403200100001500001
403534
(6-98)
3403200100001500002
3403200100001230001
3403200100001230002
3403200100001270001
3403200100001260001
3403200100001260002
3403200100001350001
3403200100001350002
3403200100001360001
3403200100001360002
3403200100001390001
3403200100001390002
3403200100001440001
3403200100001440002
3403200100001590001
3403200100001590002
3403200100001490001
(41-215)
3403200100000100003
403533
(266-286)
3403200100000100004
3403200100000140003
3403200100000140004
3403200100000150001
3403200100000150002
(35-87)
3403200100000400003
(72-184)
3403200100000400004
(43-243)
3403200100000500003
(50-278)
3403200100000500004
(89-283)
3403200100001020003
(66-282)
3403200100001020004
(103-301)
3403200100001500003
(100-304)
3403200100001500004
3403200100001330003
3403200100001330004
3403200100001370003
3403200100001370004
3403200100000070001
403536
3403200100000070002
3403200100000240001
3403200100000240002
3403200100000420001
3403200100000420002
3403200100000080001
3403200100000080002
3403200100000260001
(36-132)
3403200100000260002
3403200100000610001
3403200100000610002
3403200100000660001
3403200100000660002
(57-69)
3403200100000550001
(58-72)
3403200100000550002
3403200100000570001
(52-66)
3403200100000570002
(69-151)
3403200100000820001
3403200100000860001
3403200100000860002
3403200100001540001
3403200100001540002
3403200100000970001
3403200100000970002
3403200100001070001
3403200100001070002
(149-223)
3403200100001260003
(98-186)
3403200100001260004
(51-95)
3403200100001340001
(54-102)
3403200100001340002
3403200100000570003
403538
(4-50)
3403200100000570004
3403200100000550003
(8-56)
3403200100000550004
(11-53)
3403200100000700001
(6-58)
3403200100000700002
3403200100000760001
3403200100000760002
(13-67)
3403200100000820003
3403200100001080001
(12-36)
3403200100001080002
3403200100001110001
3403200100001110002
3403200100001190001
(30-58)
3403200100001190002
3403200100001180001
3403200100001180002
(63-147)
3403200100001260005
(40-96)
3403200100001260006
3403200100001340003
3403200100001340004
3403200100001400001
3403200100001400002
3403200100000200001
403540
3403200100000200002
3403200100000190001
3403200100000190002
3403200100000290001
3403200100000290002
3403200100000590001
3403200100000590003
403547
3403200100000590004
3403200100000550005
(79-129)
3403200100000630003
3403200100000630004
3403200100000570005
(69-73)
3403200100000670003
3403200100000670004
(47-175)
3403200100000610003
(16-118)
3403200100000610004
(63-75)
3403200100000690003
3403200100000690004
3403200100000700003
3403200100000820004
3403200100000820005
3403200100000810001
3403200100000810002
3403200100000750001
3403200100000750002
3403200100000840001
3403200100000840002
(41-81)
3403200100000980003
(48-86)
3403200100000980004
3403200100001010001
3403200100001010002
(61-133)
3403200100001080003
(38-106)
3403200100001080004
3403200100001510001
3403200100001150001
3403200100001150002
3403200100001170001
3403200100001170002
3403200100001230003
3403200100001230004
3403200100001260007
3403200100001260008
3403200100001190003
3403200100001190004
3403200100001180003
3403200100001180004
3403200100001180005
(88-148)
3403200100001180006
3403200100001340005
3403200100001340006
3403200100001400003
3403200100001400004
(56-104)
3403200100000210003
3403200100000180001
403541
3403200100000180002
(71-171)
3403200100000530001
(72-170)
3403200100000530002
(209-501)
3403200100001080005
(188-400)
3403200100001080006
3403200100001210001
3403200100001210002
(217-243)
3403200100000100005
403518
(290-312)
3403200100000100006
3403200100000260003
3403200100000260004
(89-159)
3403200100000400005
(186-268)
3403200100000400006
(245-325)
3403200100000500005
(284-336)
3403200100000500006
3403200100000640001
3403200100000640002
3403200100000530003
3403200100000530004
3403200100000740001
3403200100000740002
(101-183)
3403200100000840003
(277-309)
3403200100000900003
(312-340)
3403200100000900004
(135-207)
3403200100001080007
(108-186)
3403200100001080008
(285-319)
3403200100001020005
(284-316)
3403200100001020006
1,5,7,10,12,22,56
3403200100000310001
403535
14,16,67,69,59
3403200100000790001
3,4,6,9,57,59
3403200100000440001
3403200100000380001
3403200100001640001
58-74
3403200100000040003
3-68
3403200100000560001
3403200100000470001
(6-34)
3403200100000470002
3403200100000490003
3403200100000830001
3403200100000830002
3403200100001460001
(1-43),(2-36)
3403200100000010001
(54-140),(61-157)
5600000100000020002
(142-244),(159-263)
5600000100000020003
5600000100020470001
(6-24),(1-15)
5600000100000040001
5600000100000040002
5600000100000290001
(36-88),(33-87)
5600000100000290002
5600000100000370001
(48-92),(43-97)
5600000100000370003
5600000100000850001
(6-42)
5600000100000850002
(6-34),(11-35)
5600000100001020001
(36-86),(37-53)
5600000100001020003
8,(18-20)
5600000100001080003
(60-160),(55-79)
5600000100001250002
(162-288),(81-149)
5600000100001250003
30,32,34,36,40,42,48
1800000100003190008
99,101
1800000100002250008
1-9,11-999
5500000100008700001
5500000100008700002
644037
4602000100000060001
4602000100000080001
4602000100000110001
4602000100000120001
4602000100000130001
4602000100000140001
4602000100000150001
4602000100000160001
4602000100000170001
4602000100000190001
4602000100000200001
4602000100000210001
1-132
4602000100000230001
4602000100000240001
4602000100000250001
4602000100000260001
4602000100000270001
1-123
4602000100000280001
4602000100000290001
4602000100000300001
4602000100000310001
4602000100000320001
1-72
4602000100000330001
4602000100000340001
4602000100000350001
4602000100000360001
4602000100000370001
4602000100000380001
4602000100000390001
4602000100000400001
4602000100000410001
4602000100000420001
4602000100000430001
4602000100000440001
4602000100000450001
4602000100000460001
4602000100000470001
4602000100000480001
4602000100000490001
4602000100000500001
4602000100000510001
4602000100000520001
4602000100000530001
4602000100000540001
4602000100000560001
4602000100000570001
4602000100000580001
4602000100000590001
4602000100000600001
4602000100000610001
4602000100000630001
4602000100000640001
4602000100000650001
4602000100000660001
4602000100000670001
4602000100000680001
4602000100000690001
4602000100000700001
4602000100000710001
4602000100000720001
4602000100000730001
4602000100000740001
4602000100000750001
1-133
4602000100000760001
4602000100000850001
4602000100000780001
4602000100000790001
4602000100000800001
4602000100000810001
4602000100000820001
4602000100000830001
4602000100000840001
4602000100000860001
4600700100000170003
4600700100000290001
1,2,3,4,5
4600700100700010001
307174
(1-131),(2-152)
4600000100001030001
(133-353),(154-334)
4600000100001030002
4600000100001890001
(11-99),(20-100)
4600000100001890002
(2-6),(1-19)
4600000100002080001
(8-48),(21-85)
4600000100002080002
1,74,135
4600000100002150001
(2-54),(3-19),(41-47)
4600000100002150002
4600000100002210001
(44-168),(45-165)
4600000100002210002
4600000100003540001
61-108
4600000100003540002
4600000100004780001
26-80
4600000100004780002
(160-240),(169-267)
4600000100005390004
4600000100005390005
4600000100005840001
45-81
4600000100005840002
305030
4600000100006470001
305038
4600000100007360001
(40-168),(49-153)
4600000100007360002
4600000100007390001
4600000100007390002
(45-169),(86-150)
4600000100008670004
(2-36),(52-98),(1-99)
4600000100008700001
305018
4600000100008700002
305013
4600700100000150018
24-47
4600700100000150019
4600700100000610001
4600700100000610004
32,34,36,38,40,42,44,46,48,50,52,56,58
4600700100000610005
4600700100000610006
9,11,13,15,17,19,21,23,25,27,29,31,33,35
4600700100000610007
54,56,58,60,41,43,45,47,49
4600700100000430002
21,42,18,20,28,48,50,52,25,27,30,32,34
4600700100000430003
64,66,68,70,72,51,53,76,82,86,92
4600700100000430005
22,26,40,46
4600700100000430006
29,31,33,35,37
4600700100000430007
78,84,88,90,94
4600700100000430008
15,13,2,4,6,8,10,12,14,16,18,20,48-66
4600700100000400001
26,28,30,32,34,36,38,40,42,44,46,48,50
4600700100000400004
52,54,56,58,60,62,64,66
4600700100000400005
1,3,5,7,9,11,21,25,29,31,33
4600700100000400006
1-12,14,16,18,20
4600700100000480001
13,15,17,19,22,31,33,35,37,39,38,40,42
4600700100000480004
4600700100000700001
2,4,6,7,8,9,11,12
4600700100000740001
2,10,16,18,22,24
4600700100000740002
4600700008500010001
307153
38210840000
74-86
4600700005600140001
307150
38210820000
92-168
4600700005600110001
57-136
4600700005600130001
(9-999),(10-999)
3700000100000860001
1,2,3,4,5,6,7,8
3700000100000860002
3700000100001380001
(1-75),(2-999)
3700000100001380002
2,4,6,8
3700000100012690001
(1-999),(10-999)
3700000100012690002
(85-999),(86-998)
3700000100014440001
3700000100014440002
3700000100001990001
3700000100001990002
3700000100013210002
(31-999),
3700000100003970002
3700000100007740001
3700000100007740002
3700000100005500001
15,17,19,21
3700000100005500002
3700000100005950001
9,11,13,2,10,12
3700000100005950002
3700000100005950003
3700000100006410001
3700000100006410002
3700000100007330001
3700000100007330002
3700000100007460001
3700000100007460002
3700000100007500001
(25-999),(22-998)
3700000100007500002
3700000100007580001
3700000100007580002
(69-999),(16-998)
3700000100007670001
(1-67),(2-14)
3700000100007670002
1,1,3,3,2,4,4,6,6,8
3700000100009860001
(7-999),(10-998)
3700000100009860002
3700000100010810003
2,4,6-10,11,12-20
5200000100001240001
1,3,5,1,1¢
5200000100001240002
5700100100007560001
302029
5742
5751
54401364000
(85-998),(56-999)
5700100100007560002
302025
5754
54401368000
(34-128),(35-121)
4200000900001610001
(130-998),(123-999)
4200000900001610002
14,16,19,21
4200300100000610001
652780
4204
32413000000
(1-89),(2-80)
4200300100000770001
2-6,11,19,21,38
4200300100002060001
(34-64),(33-67)
4200001000000330001
652502
4212
32419000000
(1-31),(2-32),(69-999),(66-998)
4200001000000330002
652518
11,14
4200001000000350001
1-10,12,13,15-999
4200001000000350002
652519
(4-78),(5-97)
4200001000000720001
1-3,(80-998),(99-999)
4200001000000720002
4200001000000920001
1,2,(15-999),(18-998)
4200001000000920002
70,72,79,80
4200001000001010001
652515
1-70,71,73-78,81-999
4200001000001010002
652507
(2-28),(5-51)
4200001000001030001
1,3,4,(30-998),(53-999)
4200001000001030002
(3-7),(2-10)
4200001000001180001
1,(9-999),(12-998)
4200001000001180002
(1-27),(4-22)
4200001000001320001
2,(29-999),(24-998)
4200001000001320002
87,93,118,124,127,133
4200001000001290001
652500
1-86,88-92,94-117,119-123
4200001000001290002
125,126,128-132,134-999
4200001000001290003
4200001000000040001
4200001000000040002
4200001000001620001
4200001000001620002
4200001000001870001
1-71,81-999
4200001000001870002
(4-88),(5-75)
4200001000002170001
1-3,(90-998),(77-999)
4200001000002170002
10,16
4200001000002560001
1-9,11-15,17-999
4200001000002560002
(4-14),(3-15)
4200001000002650001
1,2,16-999
4200001000002650002
(87-127),(150-196)
4200001000002760001
1-86,128-149,197-999
4200001000002760002
4200001000002840001
(89-999),(80-998)
4200001000002840002
4200001000002850001
4200001000002850002
4200001000002310001
(8-74),(15-63)
4200001000002310002
(65-89),(76-114)
4200001000002310003
(91-999),(116-998)
4200001000002310004
(1-998)
4200001000002910001
652517
4200001000002910002
(2-32),(3-19)
4200001000003010001
1,(34-998),(21-999)
4200001000003010002
(84-998),(53-999)
4200001000003020001
652523
(1-52),(2-82)
4200001000003020002
(1-31),(2-12)
4200001000003520001
(33-999),(14-998)
4200001000003520002
4200001000003540001
4200001000003540002
2,4,6,129
4200001000003590001
1,3,5,6-128,130-999
4200001000003590002
(3-17),(4-18)
4200001000003630001
1,2,19-999
4200001000003630002
4200001000003820001
2,20,22-999
4200001000003820002
(5-13),(6-10)
4200001000003910001
1-4,11,12,14-999
4200001000003910002
(3-77),(4-76)
4200001000003960001
1,2,78-999
4200001000003960002
(2-142),(1-63)
4200001000004210001
(144-998),(65-999)
4200001000004210002
19,75-77,102-114
4200001000004370001
1-18,20-74,78-101,115-999
4200001000004370002
(8-36),(9-47)
4200001000004440001
1-7,(38-998),(49-999)
4200001000004440002
4200001000004540001
(34-998),(17-999)
4200001000004540002
(3-9),(4-8)
4200001000004550001
1,2,10-999
4200001000004550002
(66-104),(53-89)
4200001000004660001
(2-64),(106-998),(1-51),(91-999)
4200001000004660002
(3-33),(6-40)
4200001000004670001
1,2,4,(35-999),(42-998)
4200001000004670002
(2-184),(1-165)
4200001000004850001
(186-998),(167-999)
4200001000004850002
(2-84),(1-63)
4200001000005070001
(86-998),(65-999)
4200001000005070002
(2-64),(7-75)
4200001000005560001
(1-5),(66-998),(77-999)
4200001000005560002
(3-15),(4-24)
4200001000005570001
1,2,(17-999),(26-998)
4200001000005570002
4200001000005880001
1,2,5-9,11-999
4200001000005880002
4200001200000510001
5-27
4200001200000510002
4200001200000190003
4200001200000910001
4200001200000910002
654057
1-17,33
4200001200001740001
4200001200001740002
1-32,104
4200001200003320001
4200001200003320002
73 ,81,(90-94),99
4200001200003470001
1-72,74-80,81/1,81/10,84
4200001200003470002
4200001200011800001
654028
4200001200011800002
654063
4200001200003550001
4200001200003550002
4200001200004510001
4200001200004510002
3,22-27
4200001200004820001
32-45
4200001200004820002
22-71
4200001200004950001
4200001200004950002
654036
1,2,3,5,9,(11-15),(8-18),17
4200001200005000001
1/4,3/2,5,5/1,5/2,6,7,9/1,17/2,19-28
4200001200005000002
(1-127),(2-18),(48-56)
4200001200012330001
(82-126),128-182
4200001200012330002
90-137
4200001200007180001
140,151
4200001200007180002
(8-18),(3-7)
4200000200002460001
4200000200002460002
(2-28),(3-31)
4200000200003120001
4200000200003120002
(2-46),(1-47)
4200000200004960001
48,49
4200000200004960002
4200000200000920001
(1-23),(31-39),(2-38),27 
4200000200000920002
(68-152),(77-175)
4200000200003840003
(2-38),(1-19)
4200000800000190001
652401
32440000000
(40-58),(23-35)
4200000800000190002
652400
4-8
5601800001900010001
461655
53243849003
5-53
5601800006500010001
53243849006
38-40
5601800002300030001
53243849004
18-29
5601800002300020001
5601800002300010002
5601800006000010001
53243849005
5601800006900010001
461678
53243816005
5601800006900010002
5601800007600030001
53243816001
5601800002400010001
461665
53243810001
5601800002400030001
5601800003800010001
53243810003
5605500100000070001
461742
5601
53404000000
(57-101),(58-102)
5605500100000070002
461743
(1-103),(2-102)
5605500100000100001
(105-207),(104-192)
5605500100000100002
(5-37),(6-28)
5605500100000180001
5605500100000180002
(67-113),(76-132)
5605500100000270002
5605500100000270003
5605500100000420001
(39-81),(44-80)
5605500100000420002
(2-70),(1-69)
5605500100000570001
(71-159),(72-168)
5605500100000570002
(5-37),(8-42)
5605500100000460001
5605500100000500001
(85-139),(84-132)
5605500100000500002
5605500100000700001
(7-9),(10-16)
5605500100000790001
5605500100000790002
(5-39),(8-38)
5605500100000840001
5605500100000840002
5605500100000840003
461744
5605500100000890001
(17-23),30,32
5605500100000880001
(9-15),(10-100)
5605500100000880002
5605500100000880003
5605500100000960001
(81-153),(86-156)
5605500100000960002
(1-95),(2-60)
5605500100000980001
(97-101),(62-116)
5605500100000980002
(1-73),(2-84)
5605500100001010001
(75-129),(86-150)
5605500100001010002
5605500100001040001
(37-301),(2-180)
5605500100001040002
(1-89),(2-34)
5605500100001110001
(91-327),(36-308)
5605500100001110002
5605500100001200001
5605500100001220001
(13-45),(12-38)
5605500100001220002
(7-11),(6-10)
5605500100001220003
5605500100001270001
(77-295),(76-306)
5605500100001270002
3,5,7,9,13,(14-28),(38-92)
5605500100000080001
(15-63),(30-34)
5605500100000080002
5605500100000080003
(5-67),(6-64)
5605500100000090001
5605500100000090002
(9-57),(8-60)
5605500100000190001
5605500100000190002
(33-73),(30-84),29
5605500100000430001
(33-101),(36-100)
5605500100001090001
5605500100001090002
(33-101),(40-100)
5605500100001100001
5605500100001100002
(11-89),(6-80)
5605500100001170001
5605500100001170002
(19-57),(28-60)
5605500100001230001
5605500100001230002
(7-57),(12-100)
5605500100001240001
5605500100001240002
(11-79),(4-80)
5605500100001260001
5605500100001260002
(7-13),(4-10)
5605500100000450001
5605500100000450002
(1-27),(2-28),31
5605500100000430002
5605500100000460002
(31-57),(38-58)
5605500100000280001
5605500100000280002
(11-101),(18-100)
5605500100001390001
5605500100001390002
5605500005600050001
53203861003
(12-40),(1-41)
5605500005600020001
(1-61),(2-34)
6100001000006980001
346930
6176
6151
60430000000
(63-93),(36-92)
6100001000006980002
346931
(1-75),(2-116)
6100001000006990001
(77-121),(118-176)
6100001000006990002
(1-18),(2-18),19-38
6100001000000100001
346905
39-51,(52-126),(52-125)
6100001000000100002
346903
(1-118),(2-118),119-214
6100001000000510001
346916
215-305
6100001000000510002
346911
(5-143),(2-134)
6100001000000680001
(138-156),(145-159)
6100001000000680002
6100001000000780001
346902
46-80
6100001000000780002
346900
(31-41),(18-40),42-53
6100001000000920001
346919
6100001000000920002
346914
59,61,63,68,70
6100001000004460001
346918
(1-57),(2-66),65,67,69
6100001000004460002
346908
6100001000002960001
(21-41),42-51
6100001000002960002
(51-89),(52-90)
6100001000001190001
6100001000001190002
346901
(19-31),(20-32)
6100001000001240001
6100001000001240002
(27-43),(38-62)
6100001000001270001
(1-25),(1-36)
6100001000001270002
(21-129),(40-130)
6100001000001310001
6100001000001310002
(9-35),(10-36)
6100001000001440001
55-69
6100001000001450001
6100001000001450002
6100001000001470001
1 ,3 ,7 ,9 ,9¡,27-31,50-62
6100001000001470002
(1-165),(2-158)
6100001000001620001
(160-168),167,178-210
6100001000001620002
6100001000001440002
37-122
6100001000001440003
(1-95),(2-128)
6100001000004530001
(97-167),(130-168)
6100001000004530002
6100001000001750001
6100001000001750002
(27-61),(28-58)
6100001000001750003
(1-147),(1-118)
6100001000001760001
(149-175),(120-175)
6100001000001760002
(1-17),(12-18)
6100001000001900001
6100001000001900002
6100001000001910001
(19-35)
6100001000001910002
(1-17),(12-36)
6100001000001910003
6100001000001960001
(69-155),(42-156)
6100001000001960002
(1-59),(2-76)
6100001000004620001
(61-77),78
6100001000004620002
6100001000002420001
(51-135),(46-136)
6100001000002420002
(1-33),(2-50)
6100001000002470001
(35-101),(52-102)
6100001000002470002
(1-7),8-31
6100001000002670001
346909
6100001000002670002
32-136
6100001000002670003
6100001000006080001
346934
(15-117),(16-118)
6100001000006080002
346935
6100001000003040001
(69-185),(70-184)
6100001000003040002
6100001000003070001
(2-22),23-72
6100001000003070002
6100001000003160001
37-48
6100001000003160002
6100001000003210001
(25-129),(22-128)
6100001000003210002
6100001000003220001
(35-163),(32-162)
6100001000003220002
6100001000003250001
(19-137),(36-136)
6100001000003250002
6100001000003260001
(21-71),73 ,(18-70)
6100001000003260002
(73-97),(72-98)
6100001000003260003
6100001000003290001
(2-72),(41-73)
6100001000003290002
346910
6100001000003400001
(17-75),(12-72)
6100001000003400002
(77-123),(74-124)
6100001000003400003
6100001000003550001
(5-91),(6-92)
6100001000003550002
(1-11),4,6,10
6100001000003610001
(12-30),2,8,(13-31)
6100001000003610002
1,(2-14),16 
6100001000003670001
(3-15),16
6100001000003670002
(2-16),(1-17),19-32
6100001000003690001
18,24 ,28 
6100001000003690002
6100001000003720001
346906
2,4,(79-113)
6100001000003720002
(11-37)
6100001000003720003
(6-114),115-145,5,7,9,(39-77)
6100001000003720004
(1-145),(2-136)
6100001000003760001
(147-163),(138-162)
6100001000003760002
6100001000003800001
(14-92),(5-91)
6100001000003800002
6100001000003820001
6100001000003820002
6100001000004800001
(119-127),68 ,(122-128)
6100001000004800002
6100001000004060001
(3-19),(2-18)
6100001000004060002
1-31,33,35-39,41-999
6100000400000120001
347368
32,34,40
6100000400000120002
347371
71,(60-82)
6100000400000160001
1-59,(61-69),(73-79),83-999
6100000400000160002
1,2,4,7
6100000400000190001
6100000400000190002
(14-40),(15-39)
6100000400000190003
6100000400000190004
(50-999),(41-999)
6100000400000190005
49-127
6100000400000210001
6100000400000210002
(129-143)
6100000400000210003
(146-194)
6100000400000210004
(147-173)
6100000400000210005
6100000400000230001
1-38,40-999
6100000400000230002
3-9,(10-16)
6100000400000450001
(13-19),(24-42)
6100000400000450002
6100000400000450003
28-98
6100000400000490001
6100000400000490002
99-108
6100000400000490003
109-124
6100000400000490004
6100000400000620001
6100000400000620002
6100000400000620003
1-9,(10-34)
6100000400000630001
(11-27),38-62,(64-104)
6100000400000630003
(108-114)
6100000400000630004
(116-138)
6100000400000630005
6100000400000680001
6100000400000680002
(29-37)
6100000400000680003
(2-28),(3-25)
6100000400000740001
(30-138),(27-133)
6100000400000740002
(140-999),(135-999)
6100000400000740003
(1-43),(2-92)
6100000400000890001
45,47,(73-99),(94-128)
6100000400000890002
(101-113),(130-134)
6100000400000890003
6100000400000930001
98-103
6100000400000930002
104-197
6100000400000930003
6100000400000950001
6100000400000950002
6100000400001000001
55-73
6100000400001000002
6100000400001090001
9-26,(28-40)
6100000400001090002
(27-41),(42-56)
6100000400001090003
(1-93),(2-72)
6100001200001200001
6100001200001200002
6100001200003060001
6100001200003060002
(1-19),(2-54)
6100001200006060004
(2-48),(3-51)
6100001200007200001
(50-52),(53-55)
6100001200007200002
97§
6100001200008880003
245-247
6100001200009040003
1-3,8,8 
0200200000100570001
452121
0202
80202851001
0200200000100570002
452120
3400000100017880003
(1-999),(2-100)
6100000100002690001
(7-229),(2-222)
6100000100004280001
6100000100008510001
(1-187),(2-198)
6100000100009350001
(51-71),(32-54)
6100000100009420001
(3-49),(2-30)
6100000100012760001
(49-999),(124-998)
6100000100013000002
(11-135),(2-998)
6100000100017050001
6100000100000240003
(168-188)
6100000100003170007
(257-339),(284-372)
6100000100003630008
(2-20),24,26,(30-74),78
6100000100004260002
6100000100004350001
115
6100000100003170008
6100000100020550001
(1-17),(2-70)
6100000100020660001
(19-999),(72-998)
6100000100020660002
(1-47),(2-80)
6100000100011800001
(82-84)
6100000100011800002
6100000100010250004
(1-33),(6-46)
3500000200000500003
(417-999)
5902000000200120001
57246848001
(332-334),(368-998)
5902000000200120002
5900001300000100001
618204
5921
57440000000
45,47,49,55,58,59,60,63,64,64,66,67
5800000100010050003
(70-74),73,77,78,82,86,107,110,111
5800000100010050004
117,118,121,125,131,142
5800000100010050005
100,101,102
5800000100004460003
440037
12,14,26,30,33,35,54,78
5800000100004870003
29,30,30,(31-39)
5800000100005450004
9,25,27,29
5800000100007520005
90,92,97,98,98
5800000100008770004
1-3,5-8,10
5800000100011520001
5800000100011520002
1-299,301-999
5800000100005720001
5800000100005720002
5800000100011710001
1-21,23-99
5800000100011710002
3800000400000200001
665841
4,13,16
3800000400000990001
7,8,10,14,15
3800000400000980001
665837
3800000400002480001
665832
1,2,4-8,10-14
3800000400002490001
1,2,5,6,8-13,15,17-19,21,22
3800000400000150001
665834
1-7,8 ,9
3800000400002500001
665801
20-29,31
3800000400002500002
10-18,19 
3800000400002500003
33-37,43-49
3800000400002500004
51-83
3800000400002500005
16-18,20-22
3800000400002490002
26-32
3800000400000150002
665836
3800000400000150003
1-10,12-18
3800000400002510001
3800000400002520001
2601700000200100001
357217
2649
07421552000
2601700002100100001
357226
07239818000
2601700002100100002
18ª,19
2601700002100100003
2601700002100210001
2601700002100220001
475
2601700002100230001
2600000100001980003
2600000100003190003
(35-55),(62-70)
4300800100001130004
6800000400003060001
(1-999),(2-999)
6801700000200020001
393283
6828
6815
68228815002
6801700000200030001
0204400100001710001
452750
0269
80450000000
0204400100001720001
48,50,52,54,56,58,60,62,64,66,68,70
0204400100001850001
1-47,49,51,53,55,57
0204400005600020001
452756
80251870002
7001600000100010001
636131
7026
7016
69258885001
7001600000100010002
636132
7001600000100080001
636130
(18-22),(19-35)
7001600000100080002
(79-101),(90-124)
7001600000100140001
(1-61),(2-76)
7001600000100140002
85-126
7001600000100170001
7001600000100170002
34-118
7001600000100190001
4-33
7001600000100190002
7001600000100220001
(30-80),(49-99)
7001600000100220002
(22-32),(23-51)
7001600000100230001
7001600000100230002
(3-53),(4-48)
7001600000100290001
(33-41),(28-34)
7001600000100300001
(7-29),(18-24)
7001600000100300002
(21-67)
7001600000100330001
7001600000100330002
(50-66)
7001600000100330003
7001600000100390001
(49-91),(40-74)
7001600000100390002
7001600000100440001
(27-43),25,(26-40)
7001600000100440002
(88-138),(79-127)
7001600000100480001
7001600000100480002
75,(77-121),(68-114)
7001600000100510001
(1-73),(2-64),75
7001600000100510002
(42-54),(45-49)
7001600000100580001
7001600000100580002
(61-107),(60-98)
7001600000100590001
7001600000100590002
7001600000100610001
(36-48),(33-75)
7001600000100610002
(7-19),(2-26)
7001600000100630001
(23-61),(28-78)
7001600000100630002
7001600000100670001
(19-21),(16-22)
7001600000100670002
(54-78),(55-59)
7001600000100290002
30ª
4000000100005170003
5200000200100060001
606040
22421802000
14,14,15-69
5200000201700060001
22421552001
(2-16),32,(36-48),(1-59)
2300000300001100001
(40-64),(88-96),68,70,(31-57)
2300000300001200001
(14-18),(26-34),(9-11),(25-33)
2300000300000660004
2300000300001200002
122
2300000300000690002
(56-78),98,(114-116),(43-69)
2300000300000060004
(38-72),(88-100),(39-69),(83-98)
2300000300000670005
6,8,10
2300000300000590001
130,133,137,127,141
2300000300000670006
(15-41),(32-56),(65-79),(70-90)
2300000300000050010
(109-125),(130-140)
2300000300000050011
2300000300000240001
353477
2300000300000240002
353468
(1-21),(2-22)
2300000300001640001
2300000300001640002
2300000300001650001
2300000300001650002
1-355
2300000300000630001
(356-362)
2300000300000630002
(1-21),(4-42)
2300000300001570001
353466
(46-66),(27-93),(120-132)
2300000300001570002
353467
2300000300000980001
2300000300000980002
(20-34),(50-102),(61-99)
2300000300001100002
2300000300001200003
2300000300000140001
(45-65),(46-50)
2300000300000140002
2300000300001240004
2300000300000660005
2300000300300590001
353488
03408802001
2300000300300610001
2300000300300600001
2300
2300000300002720001
(72-92)
2300000100004410004
2300000100000100001
(78-268)
2300000100000100002
2300000100000100003
(79-243)
2300000100000100004
2300000100000150001
(12-40)
2300000100000150002
2300000100000150003
2300000100000150004
2300000100000160001
2300000100000160002
2300000100000160003
2300000100000160004
2300000100000140001
(44-118)
2300000100000140002
2300000100000140003
(55-115)
2300000100000140004
2300000100000770001
(22-52)
2300000100000770002
2300000100000770003
2300000100000770004
(29-43)
2300000100000770005
2300000100000770006
(2-126)
2300000100001030001
2300000100001030002
2300000100001030003
2300000100001150001
(112-182)
2300000100001150002
2300000100001150003
2300000100001150004
2300000100002180001
2300000100002180002
2300000100002180003
350038
2300000100002370001
2300000100002370002
(65-67)
2300000100002370003
2300000100002800001
(22-166)
2300000100002800002
(168-228)
2300000100002800003
2300000100002800004
(17-145)
2300000100002800005
(147-165)
2300000100002800006
2300000100002900001
2300000100002900002
(3-73)
2300000100002900003
2300000100002900004
(2-168)
2300000100002940001
(170-228)
2300000100002940002
2300000100002940003
(127-183)
2300000100002940004
2300000100003990001
2300000100003990002
2300000100003990003
(57-151)
2300000100003990004
2300000100004180001
2300000100004180002
(54-98)
2300000100004180003
(55-99)
2300000100004180004
2300000100004900001
350018
2300000100004900002
(18-74)
2300000100004900003
(15-69)
2300000100004900004
(4-60)
2300000100005310001
2300000100005310002
2300000100005310003
2300000100006690001
(4-82)
2300000100006690002
2300000100006690003
2300000100006690004
2300000100007150001
2300000100007150002
(64-100)
2300000100007150003
(67-105)
2300000100007150004
2,7,9,13,7,3/2,1,14,17
2300000700004250001
354037
2367
2319
03426000000
12,18
2300000700004250002
354024
2300000700004250003
354039
41,43,1,6,5/7,8,8
2300000700004710001
1,3,5,5,6,7,7,11,12,(14-20),22,24,26
2300000700005930001
25,27-63
2300000700005930002
354066
(73-90)
2300000700003160002
354002
90,94/16,94/23,94/24,94/46,94/50,94/18
2300000700003160003
354054
(78-204)
2300000700004700001
354003
2366
2320
2300000700004700002
354000
2300000700003160001
2302300001000000001
352594
2342
03233551001
2303300003700050001
353555
2352
03251825001
(13-109),(12-108)
2303300003700050002
353556
2303300003700070001
(15-35),(20-26)
2303300003700070002
(1-153),(2-120)
2303300003700100001
(155-219),(122-178)
2303300003700100002
(69-129),(58-142)
2303300003700180001
2303300003700180002
(2-272),(1-229)
2303300003400200001
353530
03251822001
(276-384),(231-313)
2303300003400200002
353532
(2-230),(1-249)
2303300003400320001
(232-346),(251-359)
2303300003400320002
(27-135),(2-102)
2303300003400010001
2303300003400010002
(1-149),(2-122)
2303300003400260001
(151-259),(124-242)
2303300003400260002
(1-165),(2-180)
2303300003400390001
(167-287),(182-290)
2303300003400390002
(137-153),(104-134)
2303300003400010003
353531
(1-139),(2-144)
2303300003400020001
(141-249),(146-242)
2303300003400020002
2303300003400070001
(43-137),(48-150)
2303300003400070002
2303300003400120001
(43-117),(58-158)
2303300003400120002
(1-47),(2-96)
2303300003400180001
(49-127),(98-148)
2303300003400180002
(55-63),(58-74),56
2303300003400210001
2303300003400210002
(1-83),(2-80)
2303300003400220001
2303300003400220002
2303300003400240001
(31-69),(34-78)
2303300003400240002
2303300003400340001
(13-39),(32-68)
2303300003400340002
2303300003700090001
(27-31),(48-58)
2303300003700090002
(1-105),(2-80)
2303300003700110001
(107-131),(82-102)
2303300003700110002
(43-119),(44-96)
2303300003700160001
2303300003700160002
87,(90-102)
2303300003700220001
2303300003700220002
(11-23),(10-40),48
2303300003700190001
(1-9),(25-95),(2-8),(42-110)
2303300003700190002
353535
(33-69),(60-64)
2303300003700250001
2303300003700250002
(1-39),(8-38)
2303300003700260001
2303300003700260002
(21-73),(20-96)
2303300003700320001
2303300003700320002
2303300003700430001
(57-111),(60-148)
2303300003700430002
2303300100000760001
353507
03251501000
(13-59),(14-58),12
2303300100000760002
353501
(60-106),(61-113)
2303300100000760003
353508
2303300100000050001
353500
(115-205),(126-184)
2303300100000050002
(207-279),(186-274),184
2303300100000050003
(1-161),(2-102)
2303300100000270001
2303300100000270002
(3-137),(2-182)
2303300100000440001
(173-181)
2303300100000440002
2303300100000460001
(16-76),(27-47)
2303300100000460002
2303300100001280001
(60-80)
2303300100001280002
(3-199),(2-178)
2303300100000560001
(180-272),(201-265)
2303300100000560002
(267-339),(274-352)
2303300100000560003
(1-43),(6-28)
2303300100000730001
(30-40),(47-67)
2303300100000730002
2303300100000740001
2303300100000740002
(61-127),(62-104)
2303300100000740003
2303300100000770001
(2-36),(3-29)
2303300100000770002
2303300100000900001
2303300100000900002
2303300100000340001
(118-202),(115-295)
2303300100000340002
(65-113),(62-116)
2303300100000340003
2303300100000170001
(1-117),(14-58)
2303300100000170002
(60-206),(125-295)
2303300100000170003
(208-250),(297-345)
2303300100000170004
353502
(2-66),(1-59)
2303300100000360001
155
2303300100000360002
2303300100000330001
(13-57),(24-68)
2303300100000330002
(70-134),(59-121)
2303300100000330003
2303300100000620001
(23-65),(24-70)
2303300100000620002
(72-118),(67-127)
2303300100000620003
2303300100000250001
2303300100000250002
(17-37),(4-30)
2303300100000250003
(68-152),(61-103)
2303300100000360003
2303300100000370001
(26-48)
2303300100000370002
7600000100006410008
7600000100007320008
7601700100001280001
7601700017800010001
152630
78246820001
7601700032400000001
152601
78246875001
7601700050100000001
78246810047
7601700045400010001
152632
78246880001
7600400000100310001
152760
78209811001
7600400003200010001
152771
78209822001
7600400011700010001
152766
78209833001
7600400000100350001
7600800100000150001
152830
78221501000
7600900000100110001
152730
78223815001
7600900006300120001
152750
78223806001
7600900026100170001
78223827001
7600900000100240001
2500000100004970001
15,24,26,26
2500000100004970002
12
2500000100000720001
2500000100000720002
690990
1,3-11,13-999
2500000100000720003
61,61
2500000100009290001
(1-39),10,12,14,2,42
2500000700000350001
692806
2503
05506000000
2500000700000350002
692801
4,2,2,4
2500000700000350003
692802
(2-16),9
2500000700000420001
(18-34),(19-35)
2500000700000420002
692809
(1-9),4,6,11,15,24/1,24/2,24/3,39
2500000700000040001
(8-22),(21-31),36
2500000700000040002
(16-20),(41-45)
2500000700000210001
2500000700000210002
(1-25),2,8,8/1,10,10,10
2500000700000600001
2500000700000600002
2500001200000920001
692036
(9-63),(22-62)
2500001200000920002
692038
(2-30),(1-5)
2500001200000900001
(7-89),(32-88)
2500001200000900002
(1-15),(2-24),17
2500001200000940002
3-17
2500001200001010001
(27-41),(26-34)
2500001200001010002
(13-39),(20-38)
2500001200001890002
(5-11),(6-14),13
2500001200001990001
13,(18-56),(15-57)
2500001200001990002
(20-72)
2500001200002040001
(1-73),(2-18)
2500001200002040002
2500500000100760001
692411
2515
05210551000
223,225,229
2500000100004920009
2500000100004920010
2500000100004920011
(29-81)
2500000100004920012
4401300100000190001
157800
4405
34420000000
34-100
4401300100000190002
157802
4401300100001000001
4401300100001000002
4401300100001430001
9-100
4401300100001430002
4401300100001460001
4401300100001460002
4401300100000030001
4-100
4401300100000030002
4401300100000090001
4401300100000090002
45-69
4401300100001750001
4401300100001750002
70-100
4401300100001750003
4400800001500000001
156551
4437
4415
34216804002
4400800002700000001
157955
34216804003
4400800002900000001
34216804004
4400800003700000001
34216804005
4400800005100000001
157942
34216804006
4400800005300000001
34216804007
4400800005800000001
34216804008
4400800006500000001
34216804009
4400800017900000001
34216804011
4400800007500000001
34216804010
4400800009300000001
34216804012
4400800010200000001
34216804014
4400800010300000001
34216804013
4400800010500000001
34216804015
4400800010800000001
34216804016
4400800012900000001
34216804017
4400800013100000001
34216804018
4400800014200000001
34216804019
4400800014600000001
34216804020
4400800016600000001
34216804021
4400800016700000001
34216804022
4400800018200000001
157931
34216820003
4400800003500000001
34216808002
4400800004800000001
34216808004
4400800004700000001
34216808003
4400800010000000001
34216808005
4400800018000000001
34216824014
4400800011800000001
34216808006
4400800011600000001
34216808007
4400800012700000001
34216808008
4400800018100000001
4400800013600000001
34216808011
4400800014800000001
34216808009
4400800015400000001
34216808012
4400800016100000001
34216808013
4400800001100000001
157946
34216812002
4400800001600000001
34216812003
4400800002200000001
34216812004
4400800002800000001
34216812005
4400800006300000001
34216812001
4400800009200000001
34216812008
4400800010600000001
34216812009
4400800013300000001
34216812012
4400800015900000001
34216812013
4400800000900000001
157945
34216816002
4400800004600000001
34216816003
1-257
4400800006400000001
34216816004
4400800006900000001
34216816005
4400800007700000001
34216816007
4400800008300000001
34216816006
4400800009000000001
34216816008
4400800011900000001
157944
34216816009
4400800015500000001
34216816010
4400800017400000001
157940
34216816011
4400800000200000001
157956
34216820002
4400800000500000001
157943
4400800003800000001
34216820006
4400800005600000001
34216820008
4400800006200000001
34216820009
4400800007300000001
34216820012
4400800007200000001
34216820010
4400800008000000001
34216820011
4400800008800000001
34216820013
4400800009800000001
34216820014
4400800011000000001
34216820016
4400800011100000001
197956
34216820015
4400800012500000001
34216820001
4400800012300000001
34216820017
4400800013000000001
34216820018
4400800014300000001
34216820019
4400800015600000001
34216820021
4400800015700000001
34216820022
4400800017100000001
34216820023
4400800017300000001
34216820024
4400800000300000001
157947
34216824002
4400800002000000001
34216824003
4400800001900000001
34216824004
4400800002600000001
34216824006
4400800002400000001
34216824005
4400800003100000001
34216824008
4400800017800000001
157949
34216824007
1-279
4400800004300000001
34216824009
4400800004500000001
34216824010
4400800008200000001
34216824012
4400800011500000001
4400800012400000001
34216824015
4400800013400000001
34216824016
4400800015100000001
34216824018
4400800014400000001
34216824017
4400800016000000001
34216824019
4400800016300000001
34216824020
4400800016500000001
34216824021
4400800016800000001
34216824022
4400800017700000001
34216824023
4400800000700000001
157932
34216828002
4400800001000000001
34216828003
4400800001200000001
157933
34216828004
4400800001300000001
34216828005
4400800001400000001
34216828006
4400800001700000001
157934
34216828007
4400800002100000001
34216828008
4400800003300000001
34216828011
7-9
4400800003300000002
4400800003400000001
34216828012
4400800003600000001
34216828013
4400800004000000001
34216828014
4400800004100000001
34216828015
4400800004400000001
34216828016
4400800006000000001
34216828017
4400800006100000001
34216828018
4400800006700000001
34216828020
4400800006800000001
34216828021
4400800007100000001
4400800007600000001
34216828023
4400800007400000001
34216828024
4400800008900000001
34216828027
4400800009100000001
34216828028
4400800009400000001
34216828029
4400800009500000001
34216828030
4400800010900000001
34216828033
4400800011200000001
34216828035
4400800011700000001
34216828036
4400800012200000001
34216828037
4400800012800000001
34216828038
4400800013500000001
34216828000
4400800015300000001
34216828040
4400800016400000001
34216828041
4400800017200000001
34216828044
4400800005900000001
157951
34216832006
4400800003000000001
34216832002
4400800007000000001
34216832007
4400800011300000001
34216832014
4400800008400000001
34216832009
4400800005200000001
34216832004
4400800008500000001
34216832011
4400800012600000001
34216832018
4400800014500000001
34216832000
4400800007800000001
34216832010
4400800014900000001
34216832021
4400800012000000001
34216832017
4400800018400000001
4400800010700000001
34216832016
4400800008100000001
34216832008
4400800010100000001
34216832012
4400800015200000001
34216832020
4400800005700000001
34216832005
4400800002300000001
34216832003
4400800015800000001
34216832023
4400800017500000001
34216832024
4400800010400000001
34216832015
1,6-8,13,14,17,19,21,24,4,11,33-37,40-54
4400100016400000001
156556
4414
34214844010
1-18,20,21,24,25,30,37,39-48,56,58,54
4400100017200000001
34214844011
5,11,13
4400100021600000001
156511
34214844014
2,43,42,20,44,5,106,31,57
4400100026400000001
34214844017
4400100001500000001
156552
34214808011
4400100016100000001
34214808024
4400100011300000001
34214808021
4400100005400000001
34214808006
4400100007300000001
34214808012
4400100007200000001
34214808001
4400100027800000001
34214808010
4400100016700000001
34214808037
4400100023500000001
34214808032
4400100007500000001
34214808013
4400100013500000001
156553
34214808023
4400100021000000001
34214808030
1-109
4400100016900000001
34214808025
4400100003600000001
34214808004
4400100003000000001
34214808003
4400100005500000001
34214808007
4400100006100000001
34214808008
4400100010900000001
156550
34214808019
4400100021200000001
34214808031
4400100002400000001
34214808002
4400100007100000001
34214808009
4400100024900000001
34214808034
4400100028700000001
34214808035
4400100024200000001
34214808033
4400100016500000001
34214808022
4400100026100000001
34214808036
4400100019700000001
34214808027
4400100008800000001
34214808014
4400100019900000001
34214808028
4400100010700000001
34214808018
4400100009900000001
34214808017
4400100008700000001
34214808015
4400100009800000001
34214808016
4400100003900000001
34214808005
4400100028400000001
34214808026
4400100005800000001
156518
34214824006
4400100020400000001
34214824017
1-22,24-26,28
4400100004100000001
156519
34214824004
1,4,6-25,27
4400100025300000001
34214824025
1-12,14,17,19
4400100005900000001
34214824008
4400100027700000001
34214824007
1,2,4-8,10-37,39-45
4400100013700000001
34214824012
1-11,13-18
4400100001400000001
34214824003
1-18,20,22,23
4400100023200000001
34214824020
1-3,5-13,15,17-19,21-23,25
4400100023300000001
34214824021
1-10,12-24,26-31,35,36,38,39,44,45-48,53
4400100018700000001
34214824015
1-20,22-24,26-32,34
4400100016800000001
34214824014
1-3,5-26,28
4400100022600000001
34214824019
2-5,7,8,10,12-14,17-19
4400100019200000001
34214824016
1-3,5-7
4400100006300000001
34214824009
4400100014700000001
34214824013
4400100025600000001
34214824026
4400100011400000001
34214824011
4400100026900000001
34214824028
2,5,8,9
4400100026000000001
34214824027
1-6,11
4400100024100000001
34214824022
4400100029600000001
156543
34214844005
4400100010200000001
34214820008
4400100011900000001
34214820010
4400100007600000001
34214820005
4400100024000000001
34214820018
4400100014900000001
34214820012
4400100009200000001
34214820007
4400100006600000001
34214820003
4400100017800000001
34214820020
4400100012600000001
34214820011
4400100019100000001
34214820016
4400100021800000001
34214820017
4400100027100000001
34214820019
4400100004300000001
34214820002
4400100008000000001
34214820006
4400100015600000001
34214820013
4400100006800000001
34214820004
4400100009400000001
156559
34214840005
4400100023000000001
156512
34214836001
4400100010000000001
156539
34214840007
4400100008900000001
34214840004
4400100023700000001
34214840018
4400100028200000001
34214840000
4400100000400000001
34214840002
4400100020100000001
34214840015
4400100016600000001
4400100027000000001
34214840021
4400100016200000001
34214840013
4400100004700000001
4400100003300000001
156522
34214816008
4400100011100000001
34214840008
4400100015000000001
34214840012
4400100017500000001
34214840014
4400100013200000001
34214840010
4400100027500000001
156536
34214828003
4400100004500000001
34214828004
4400100006000000001
34214828005
4400100027900000001
34214828007
4400100007700000001
34214828008
4400100007900000001
34214828009
4400100029700000001
4400100019000000001
34214828017
4400100028300000001
34214828016
4400100019800000001
34214828019
4400100020200000001
34214828020
4400100020700000001
34214828022
4400100023800000001
34214828025
4400100023900000001
34214828026
4400100025000000001
34214828027
4400100022200000001
156523
34214812023
4400100017900000001
34214812016
4400100015400000001
34214812013
4400100029800000001
34214804008
4400100011600000001
34214812011
4400100028500000001
34214812025
4400100025800000001
34214812028
4400100017400000001
34214812014
4400100021700000001
34214812020
4400100022000000001
34214812021
4400100019500000001
34214812018
4400100013300000001
34214812012
4400100004600000001
34214812005
4400100010100000001
34214812010
4400100009300000001
34214812029
4400100022900000001
34214812024
4400100022100000001
34214812022
4400100003800000001
34214812030
4400100005700000001
34214812006
4400100003100000001
34214812031
4400100025400000001
34214812027
4400100012100000001
34214812000
4400100024300000001
34214812026
4400100021500000001
34214812019
4400100017600000001
34214812015
4400100002700000001
34214812004
4400100012800000001
156510
34214804017
4400100020900000001
34214804022
4400100011700000001
34214804015
4400100009100000001
34214804013
4400100025700000001
34214804028
4400100002300000001
34214804003
4400100025500000001
34214804027
4400100005300000001
34214804009
4400100005000000001
4400100021400000001
34214804024
4400100015300000001
34214804019
4400100023600000001
34214804026
4400100002500000001
34214804004
4400100001700000001
34214804002
4400100002800000001
34214804005
4400100005600000001
34214804010
4400100004900000001
34214804007
4400100008100000001
34214804011
4400100009700000001
34214804014
4400100009000000001
34214804012
1-26,28,30,32-38,40,42
4400100013600000001
34214811002
1-16,18-27,29-32
4400100020300000001
34214811004
1-12,14-22,24,26,32,34,28
4400100017700000001
34214811003
4400100012200000001
156521
34214816001
4400100000600000001
34214816003
4400100000900000001
34214816004
4400100001200000001
34214816005
4400100000300000001
34214816002
4400100002000000001
34214816006
4400100004200000001
34214816010
4400100005100000001
34214816011
4400100029900000001
4400100011800000001
34214816014
4400100013000000001
34214816015
4400100014800000001
34214816018
4400100014400000001
34214816017
4400100013900000001
34214816000
4400100015700000001
34214816019
4400100022300000001
34214816021
4400100019300000001
34214816020
4400100024700000001
34214816022
4400100003400000001
34214816009
4400100003500000001
4400100006200000001
34214816026
4400100027400000001
34214816024
4400100002200000001
34214816025
4400100018100000001
34214816027
4400100026300000001
34214816023
4400100001600000001
156520
34214818003
4400100002600000001
34214818004
4400100003200000001
34214818005
4400100008500000001
34214818006
4400100010800000001
34214818007
4400100012300000001
34214818008
4400100014100000001
34214818009
4400100014500000001
34214818010
4400100018400000001
34214818012
4400100018500000001
34214818013
4400100020500000001
34214818014
4400100021100000001
34214818000
4400100022500000001
34214818015
4400100000800000001
34214818002
4400100006700000001
156535
34214834002
4400100011000000001
34214834003
4400100012900000001
34214834004
4400100020800000001
34214834006
4400100021900000001
34214834007
4400100015100000001
34214836010
4400100000700000001
34214836003
4400100007800000001
34214836009
4400100004400000001
34214836007
4400100030000000001
34214836008
4400100017100000001
34214836013
4400100002100000001
34214836006
4400100001900000001
34214836005
4400100000200000001
34214836002
4400100027600000001
34214836004
4400100016000000001
156517
34214832009
4400100007000000001
34214832003
4400100018200000001
34214832012
4400100010500000001
34214832005
4400100014600000001
34214832006
4400100015800000001
34214832008
14-59
4400100010300000001
34214832004
4400100018800000001
34214832013
4400100002900000001
34214832002
4400100026500000001
156514
34214832017
4400100018000000001
34214832011
4400100024800000001
156516
34214832014
4400100026200000001
34214832016
4400100017000000001
34214832010
4400100027300000001
34214832018
3,4,6,12,23,25,29
5600400100000750001
462634
5604
53413000000
1-11,13,13,(14-30),34,38,42,44
5600400100000060001
462635
(50-56)
5600400100000060002
(4-24),(30-38),(44-58)
5600400100000070001
23,49,53,57,65,77,79,(83-87),91,93,107
5600400100000510001
3,5-8,10,12-17
5600400100000120001
462630
1-10,12-13,15,17-18,20-29,31,32,34-39
5600400100000130001
462633
41-55,57-59,61-64,66,68
5600400100000130002
21,27,29,33
5600400100000540001
7,9,13,15,19,27
5600400100000620001
(4-6),(53-71)
5600400100000010001
462631
5600400100000670001
5600400100000200001
(72-118),(73-119)
5600400100000220001
3-9,11,11
5600400100000270001
(4-10),(14-22),(26-38),(44-54)
5600400100000300001
(60-64),68-86
5600400100000300002
(5-13),14
5600400100000680001
4,16,37
5600400100000530001
5600400100000480002
2,3,5,(6-14),15,18,20,24,29
5600400100000590001
5600400100000340001
6,7,9,15,19,23,(27-37)
5600400100000570001
(1-5),(10-18),22,24,(30-34),39
5600400100000350001
(43-47),50,55
5600400100000350002
2-19,21-26,28-31,33-35,39,46
5600400100000600001
5600400100000360001
1-7,9,10-15,17-27,29,31,(37-47)
5600400100000370001
1,3-12,(14-52)
5600400100000690001
8,12,27,29,(35-59),62,65,67,72,74
5600400100000500001
(82-88),94,95,98,100
5600400100000500002
(76-128),(75-121)
5600400100000420002
5600400100000290001
5600400100000250001
1-10,(12-20),36
5600400100000700001
5600400100000710001
13-19,21-24,36-38
5600400100000170001
5600400100000040001
3-14
5600400100000050001
5600400100000080001
5,12,14
5600400100000730001
5600400100000110001
3-12,14
5600400100000720001
5600400100000160001
5600400100000180001
5600400100000190001
5600400100000210002
5600400100000240001
3,8,10,15,18,20,24
5600400100000560001
5600400100000260001
5600400100000280001
5600400100000470001
5600400100000310001
5600400100000320001
3-14,17,19-22,24-30,32-40,42-48
5600400100000330001
5600400100000740001
5600400100000460001
5600400100000760001
5600400100000380001
5600400100000390001
5600400100000400001
(1-7),8,10,11,14,18,19,22,24,28,29
5600400100000640001
5600400100000410001
5600400100000430001
5600400100000440001
5600400100000450001
1-19,22,24
5600400005600010001
53413810000
1-13,15-26,(30-34)
5600400005600020001
1-13,(15-21),25,27,29-37,(41-49),53,55
5600400005600030001
56,58,59,61-63,65,67
5600400005600030002
1-6,(8-16),17,20-22,24-30,32,34,36-43
5600400005600040001
5600400005600040002
5600400005600050001
5600400005600060001
1-6,9-15,17,21,23
5600400005600070001
1-7,9,(12-16)
5600400005600080001
1,3-7,9-12,14,16-24,26,32,34-36,(38-44)
5600400001900030001
462644
53214807002
1-4,6-8,10-13,(16-20)
5600400001900050002
1-7,(11-15)
5600400001900010003
1,3,(7-13),(2-32),(38-40),44,(48-52)
5600400001900020003
23,(31-41)
5600400001900020004
3,5,(9-17),6
5600400001900060001
1-6,8,11,16,17,19,22,23-28,30,32
5600400001900040001
1,2,4,6-19,(21-25),(29-33)
5600400003200010001
462305
53214802003
5600400003200020001
(1-9),2,(10-14),18
5600400003200030001
5600400003200040001
(4-12),9
5600400000400070001
462648
53214803002
5600400000400100001
1-6,8,9,15,17,19,23,25
5600400000400080001
1,(2-14),7
5600400000400050001
1-8,10,12,13,18
5600400000400020001
1,4,5,8,9,13,14,15,17,20,27
5600400000400040001
(1-41),2,(6-10),14,16,20
5600400000400090001
(3-25),(10-14),18
5600400000400010001
1,3-11,(13-21),16,22,25,27
5600400000400030001
5600400000400060001
1,10,14,16,27,31,35,37
5600400002700010001
462304
53214840003
2-6,9,12-20,22-30,32-44
5600400002800010001
462610
53214840004
1-5,9,11
5600400002800020001
1-14,16-21,26
5600400003000030001
53214840005
1-4,9
5600400003000020001
1-9,11-19,21-23,25-27
5600400003000010001
3-5,7,8,12,16,18,24,26,32,38,42,48,50
5600400000300120001
462647
53214803001
1,2,4-7,13-19,(21-29)
5600400000300010001
5600400000300100001
1-21,24,(25-29),28,31-36,38,42,44
5600400000300020001
1-7,13
5600400000300030001
5600400000300170001
1,4,7,8
5600400000300110001
5600400000300040001
1-3,(5-11),10,17,19,(23-29),(35-39)
5600400000300050001
1,2,4,5,6,9,13,15-19,21,25
5600400000300150001
1-13,16,17,(21-31)
5600400000300060001
4,6,14,16,20,22,24,30
5600400000300140001
4-6,9,15,19,21
5600400000300070001
(1-7),8-13
5600400000300080001
1,2,4,6,10,12,13
5600400000300090001
5600400000300130001
5600400004500020001
462306
53214804002
1,3-6,8,9-16,19-34,36-39,41-46,48,50
5600400004500010001
1-12,16,18,20,24,26,28
5600400004500030001
5600400004500040001
1,3,4,9
5600400003300040001
462615
53214802002
1,3,7,9,10,12,13-16,29,31,33
5600400003300030001
1,3,8,9,12,13,19,24-38,40-42
5600400003300010001
1-4,6,(9-23),12,26,27
5600400003300020001
1,4-8,10-13,15,17
5600400001500010001
462640
53214804001
1-3,5,7
5600400001500080001
5600400001500040001
5600400001500060001
3-22,24
5600400001500070001
1-7,10,12-15,17,19-23,26,28,34,(38-46)
5600400001500020001
5600400001500050001
(1-11),(15-25)
5600400001500030001
5600400001500100001
5600400001700090001
462645
53214807001
(3-15),(8-20)
5600400001700110001
2,6,7,9,10,12,13,16,18,19,21,25-30
5600400001700060001
5600400001700060002
2,4,5,8,9,11-25,27,29-39
5600400001700040001
1-7,(9-15)
5600400001700100001
5600400001700120001
1,2,4-10,12-30,32-40,42
5600400001700010001
1-4,6,8,13-15,18-20,22,27,28,32
5600400001700070001
(1-5),8,(9-21),12
5600400001700080001
1-4,6,7,9,11-27,(30-34),38
5600400001700030001
1-4,6-9,14-34,38,40,42
5600400001700050001
1,3-9,13,(14-18),19-28,(32-44)
5600400001700020001
1-9,11,12,14,16,17,19,31
5600400002100010001
53214840006
2,5-10,(11-15),18-22,24,25,28,29,32
5600400002100030001
5600400002100030002
1-6,8-10,12,14-19,21-26
5600400002100020001
2-4,6,7,9-11,13-23,25,26,28-33
5600400002400010001
53214840007
5600400002600020001
53214840008
5600400002600030001
1,3-7,9-20,22-27
5600400002600050001
5600400002600040001
1-26,(28-34)
5600400002600010001
2,4,5,7,(8-12),11,13,15-18,(20-24),30
5600400000800010001
462646
53214803003
5600400000800010002
33,35,36,38-48,50,51,53-59
5600400000800020001
5600400002500060001
53214840002
2-5,10,11,13,14,18
5600400002500030001
1,3,5-17
5600400002500050001
5600400002500070001
1-11,16,18
5600400002500020001
(1-33),2,16
5600400002500010001
2,4-13,15-17
5600400002500040001
5600400002500080001
2,8,12,14,16,20
5600400001300030001
462612
53214815002
2,4,(3-11),15,17
5600400001300020001
1-5,9-13,16-18,20-33,35,43
5600400001300010001
(1-5),(9-21)
5600400001300040001
5600400001000040001
462617
53214813001
5600400001000050001
5600400001000090001
1-18,21,22
5600400001000020001
1-4,6-13
5600400001000110001
5600400001000120001
2,3,5-16
5600400001000070001
5600400001000080001
1-6,8-15,17-23,25,28,30-33,35,36,38-52
5600400001000100001
54-78
5600400001000100002
5600400001000060001
5600400001000010001
5600400001200060001
462618
53214815001
5600400001200090001
1,2,6-8,10-12,14-16,18,20,21-25,27-31
5600400001200010001
33-36,(41-45),51,53
5600400001200010002
1,3,(7-21),39
5600400001200020001
1-15,17,21,23,25
5600400001200080001
5600400001200030001
5600400001200070001
(1-9),13,15,16
5600400001200050001
1-6,8-12,(14-20)
5600400001200040001
1-6,8-16
5600400000900010001
53214813003
5600400000900040001
1-4,8
5600400000900030001
1-15,17-19
5600400000900020001
1,3-6,8-11,13-17
5600400001100020001
462613
53214813002
1-5,7-12
5600400001100010001
1-5,7-13,15,16,18-22,24-27,30,32,33
5600400001100030001
35-48,50,(51-73),72
5600400001100030002
1-14,16,18,(22-26)
5600400001800020001
53214807003
1-9,11 ,13-26
5600400001800010001
1-7,9
5600400001400030001
53214804003
5600400001400040001
(1-7),(8-16)
5600400001400010001
2,3,(6-38)
5600400001400020001
5600400001400050001
(2-18),23,33,35,37,39
5600400003600050001
53214819001
5600400003600010001
5600400003600020001
1-13,15,16,18,20,21,23,25-45
5600400003600030001
1-18,(20-24),(28-48)
5600400003600040001
1-15,(17-21),25
5600400001600020001
53214804004
1-12,15,16,18-26,28,(29-33),34-45
5600400001600030001
47,49,51
5600400001600030002
2-5,(7-17)
5600400002000010001
53214840009
2-5,(7-13)
5600400002000050001
(3-9),10-16,18,20
5600400002000040001
1-23,25-30,33-43,(45-49)
5600400002000030001
5600400002000020001
5600400000600050001
53214803004
5600400000600030001
(1-5),6,8,10-13,15,19,21
5600400000600010001
5600400000600040001
1-10,12-18,(20-26),25
5600400000600020001
5600400000600060001
1-3,5,6,8
5600400000700030001
53214803005
1-15,(18-24),23,25-27,29-34,36-38,40,41
5600400000700010001
5600400000700010002
1,2,4,7,8,10-14,16,17,19-24,28-32,34
5600400000700020001
1,2,4-7
5600400000700040001
5600400000700050001
1-5,8,10-12,14-28,31
5600400002300020001
53214840001
1,3,6,8,9,12-15,20,21,23
5600400002300050001
3,5,10,12,14,18
5600400002300080001
1-8,10,11,13,14,16,23,24,26-29
5600400002300060001
2,3,5-8,10-13,15,16,22,27,29,31
5600400002300040001
3,8-16,18-21,23,26,28,30,31,34,35,37
5600400002300010001
2-5,7-11,13,14,16,17,20-22,24,25,30
5600400002300030001
4-6,8,10
5600400002300120001
1-3,(5-9),8,13,16,18-22,25,26,28
5600400002300070001
3,7,9,11
5600400002300110001
5,6,8-15,18
5600400002300100001
2-11,13
5600400002900030001
462370
5600400002900010001
1-3,5,8,10,14-17,19,21-33,35,40,42
5600400002900020001
5600400004600010001
53214807004
5600400004600020001
1-6,8,10
5600400003100040001
53214802001
3,6,7,9-12,14,16
5600400003100020001
1,2,4,6,7,9-13,15,17
5600400003100010001
5600400003100060001
1-14,16,18
5600400003100050001
1-9,11,13-16,18,20,22,24,25,31
5600400003100030001
2303500000300030001
352117
03254804001
2303500000300030002
2303500000300030003
352118
2303500000300030004
(34-72)
2303500000300230001
2303500000300230002
2303500000300230003
2303500000300230004
(62-108)
2303500000300120001
2303500000300120002
(69-105)
2303500000300120003
2303500000300120005
2303500000300120006
(126-366)
2303500000300170001
(93-235)
2303500000300170002
2303500000300170003
2303500000300170004
(228-270)
2303500000300160001
(113-131)
2303500000300160002
(2-224)
2303500000300160003
2303500000300160004
2303500000300310001
2303500000300310002
(48-78)
2303500000300310003
(65-115)
2303500000300310004
2303500000300370001
2303500000300370002
2303500000300370003
(23-141)
2303500000300370004
2303500000300390001
2303500000300390002
2303500000300390003
2303500000300390004
7400001100000460001
7400001100000600001
2,8,12
0200200000100080005
1,(5-27),29,29 ,31,(33-47)
0200200000100080006
452122
(4-6),10,(14-100)
0200200000100080001
0200200000100080007
1-37,39,42-301
0200100100000670001
38,40,41
0200100100000670002
58,60,62,45
0200100100002070002
450028
115-118
0200100100003430003
0200100100003860001
1-13,15-301
0200100100003860002
0200100100006120001
1,13-300
0200100100008590001
0200100100008590002
450069
3100800100000030001
309186
22,24,22 
3100800100000030002
309181
2,4,6,8,10,12,14,16
3100800100000030003
309189
3100800100000040001
3100800100000040002
38,40,42,44,46,48,50,52,54,56,58
3100800100000040003
68,70
3100800100000040004
(8-22),13
3100800100000190001
21,21 ,19,25 ,27 ,23
3100800100000190002
34,28,32
3100800100000190003
3100800100000090001
52,54,56,58,60,62,64,59,61,63,65,67,68
3100800100000090003
70,72,74,77,75,73,71,66,92,88,90,86
3100800100000090004
113,111,78,76,101,103,105,107,109,93,91
3100800100000090005
89,87/1
3100800100000090006
123,94,115,115 ,98,119,121,121 ,121¡
3100800100000090007
309190
123 
3100800100000090008
3100800100000120001
3100800100000120002
(31-39),43,45,(68-78),(51-59),22,24
3100800100000120003
(86-92),96,(65-71),(102-110)
3100800100000120004
3100800100000010001
3100800100000010002
86-111,(48-62),64-85
3100800100000010003
3100800100000020001
3100800100000020002
309180
(30-36),(40-52),(43-53),39,37,67 ,57
3100800100000020003
69,69 ,59,63,63 
3100800100000020004
(1-23),(2-38),37
3100800100001760001
(39-43),45-64,66,73-81
3100800100001760002
3100800100001160001
19,21-26,28-33,35,37-40,42,44,48
3100800100001160002
50,47,51,53,54,56,58,60
3100800100001160003
12 ,6 ,19,16,21,16 ,30,32,34,18,24,12,14
3100800100000060001
12¡
3100800100000060002
2,2 ,(5-17),2¡,8,10,10 ,10¡
3100800100000060003
3100800100000070001
(1-13),4¡
3100800100000070002
(16-32),(2-12)
3100800100000070003
(1-27),(31-39)
3100800100000110001
43-55,(4-12),57-59,(97-103),81-95,16
3100800100000110002
63-97,34,36,36 ,40,40 
3100800100000240001
37/1,57,1-35
3100800100000240002
3100800100000900001
3100800100000900002
(40-54),(41-59),3-9
3100800100001690001
3 ,10-39
3100800100001690002
3100800100009000001
31-76
3100800100009000002
63-69
3100800100000040005
24,26,28,30-38,(13-29)
3100800100000530001
1-11,(12-20)
3100800100000530002
(26-38),(23-37),39,40,41,42
3100800100001630001
3-16
3100800100001630002
3100800100000050001
39,49,47,51 ,51,28,26,30,49 ,41,43,45
3100800100000050002
3100800100000050003
1,3,4,9,18-22,27-29,36-38,40
3100800100001150001
3300000100001700003
3300000100002540004
(1-5),(2-12),16
3300000100002540005
(7-11),14
3300000100002540006
600025
11,11,11,11,11§
3300000100003330006
11,11,11,11,13
3300000100003330007
7100000101300010001
7100000101300010002
7100000101300020001
7100000101300020002
7100000101300030001
7100000101300030002
7100000101300040001
7100000101300040002
(17-53),(16-54)
7102200100000590001
301600
7117
70428000000
(35-57),(34-56)
7102200100000230001
(25-35),(24-36)
7102200100000490001
7102200100001590001
7102200100000540001
7102200100000370001
7102200100001360001
(17-31),(18-32)
7102200100001060001
7102200100000490002
301602
7102200100000590002
301607
(91-141),(90-140)
7102200100001590002
301608
(43-97),(42-96)
7102200100000370002
7102200100000540002
(73-115),(72-114)
7102200100001360002
7102200100000230002
7102200100001060002
23,25,(26-30),(34-38)
7100200100000450001
7100200100000450002
(3-71),(4-52)
7100200100000500001
301365
54,94,98,100,112
7100200100000500002
301370
1,3,(7-31),2,4,(8-24)
7100200100000720001
33,39/4,26,28,30/24,34/6
7100200100000720002
1 ,2,2,(6-10)
7100200100001110001
3,5,12/9,14,18/1,20,26
7100200100001110002
(1-127),(2-130)
7100200100001630001
(134-138),(129-135)
7100200100001630002
1-15,17,19
0301300000100910001
671560
0317
0313
81235551000
(27-37),(16-24)
0301300000100910002
671561
7,7 
1600000100000920001
1600000100000920002
1600000100000920003
5,6,7,8/50,9,12
1600000100004240001
1-4,10,11,13,16,19,22,23,24-26,30-999
1600000100004240002
14,15,17,18,20,21,23 ,27,28 ,28,29
1600000100004240003
1600000100006710001
28,43,119
1600000100045250001
6 ,14,16,20,22
1600000100020070005
(72-104)
1300000100001340003
(21-61)
1300000100001400003
1300000100001400004
(93-103)
1300000100001400005
1300000100001400006
1300000100001400007
(56-102),190
1300000100001400008
1300000100000840001
(72-104),(25-55)
1300000100000840002
1300000100001000001
(28-56),(25-55)
1300000100001000002
1300000100000440001
(16-40),(15-39)
1300000100000440002
1300000100000640003
1300000100001350001
(60-72),(25-43)
1300000100001350002
1300000100000230001
430031
(2-22),
1300000100000230002
430012
1300000100002170001
(8-34),
1300000100002170002
430024
(2-10),
1300000100000460001
(12-52)
1300000100000460002
430033
1300000100001110001
,(19-35)
1300000100001110002
1300000100000870001
(2-80),(11-37)
1300000100000870002
(82-118),(39-47)
1300000100000870003
1300000100001120001
(28-78),(31-49)
1300000100001120002
(1-11),15,10
1300000100002250001
,(17-999),13
1300000100002250002
(2-88),(1-53)
5200000200000480001
606030
(55-89),90-999
5200000200000480002
5200000200000810011
22,22
5200000200000790003
15,19,26
7400000100011090002
1400000100001630001
8,12,30,32,7,11
1400000100002930001
1400000100002460001
1400000100000690001
1400000100000960001
6400000100015060003
(195-261),263,(200-256)
6400000100010680013
(213-337),(341-999),(220-999)
6400000100011790004
7800000000005190001
7800000000005190002
7800000000006020004
(1-5),(6-10)
7800000000001060003
7800000000003750006
62
7800000000005900005
7800000000007950003
7800000000010030004
6100000100003750001
(98-102)
6100000100003750002
1 ,1¢,1£,1«,2£
6100000100007790005
5302000100000300001
97-103
5302000100000300002
5302000100000300003
174211
105-160
5302000100000300004
5302000100001250001
5302000100000450001
17-23
5302000100000450002
5302000100001120001
5302000100001690001
5302000100001250002
5302000100000450003
24-38
5302000100000450004
5302000100001120002
5302000100001690002
5302000100001690003
1600000100015760003
20,25
1600000100006940005
1600000100047560001
(51-71),(42-68)
3401800100000270002
3401800100000200001
(94-106),(93-111)
3401800100000200002
(108-112),(113-121)
3401800100000200003
(59-163),(66-178)
3400000100001900004
3400000100003380001
(1-119),(12-66),(70-118)
3400000100003380002
3400000100030060001
(45-49),(44-46)
3400000100030060002
(4-20),31,33,45
3400000100009300002
1 ,1¡,(4-8),(12-16)
3400000100026470001
3400000100026470002
1-7,9-999
3300000100002730001
3300000100002730002
1-178
3601700000100220001
396310
20225892000
179-999
3601700000100220002
20225891001
5200400100003170001
606407
5200400100003170002
1-9,18
5200400100002470001
8 ,8¡,9 ,10-14,16,19-999
5200400100002470002
5201800100000720001
607060
22224501000
5201800100000720002
607061
259-999
5201800100000010001
607067
1-258
5201800100000010002
(38-998),(53-999)
5201800100000040001
(2-36),(1-51)
5201800100000040002
5201800100000060001
(9-999),(22-998)
5201800100000060002
5201800100000830001
81-999
5201800100000830002
607062
5201800100001800001
5201800100001800002
5201800100000020001
96-999
5201800100000020002
15-18
5201800100000110001
1-14,19-999
5201800100000110002
(1-139),(2-140)
5201800004000010001
607036
22224562000
(141-999),(142-998)
5201800004000010002
607037
5201800004000040001
5201800004000040002
5201800000800390001
607033
22224559000
(2-998),(63-999)
5201800000800390002
607034
5202800100001890001
5202800100001890002
5202800100001290001
(70-998),(81-999)
5202800100001290002
1-3,(7-999)
5203100100000210001
607100
5223
22241501000
(6-998),4,5
5203100100000210002
607102
5200000300000370003
(9-15),(36-60)
5200000300000130003
24,24/39,24/40
5200000100010340004
13,(14-20)
5200000100013390001
5200000100013390002
2,11,12
5200000100013390003
5200000100012460004
5200000100013480001
5200000100013480002
2,3,4,5
5200000100008490001
5200000100008490002
18,18,20
5200000100005210003
5200000100003840003
5200000100004340004
5200000100001520001
5200000100001520002
(2-18),(3-17)
5200000100004100001
(20-52),(21-51)
5200000100004100002
4,10,8,8¡,12,15,21-27
5200000100000440002
2,4,10,12
5200000100001460008
48-56,43
5200000100003800004
(9-75),(4-76)
7600000100004530001
150029
7600000100004530002
150002
11/2,(6-16)
7600000100000200001
(37-79),(46-144)
7600000100000960001
(5-33),(2-42)
7600000100000960002
7,9,(2-44),23
7600000100001150001
8¡,(46-98)
7600000100001150002
7600000100001170001
(35-85),(30-74)
7600000100001170002
(1-61),67,69,79,2,4,(8-12),(52-76),73
7600000100001470001
16,18,20,28,(30-42)
7600000100001470002
4,(18-22)
7600000100002960001
11,21,(24-28),34
7600000100002960002
(33-73)
7600000100003050001
7600000100003050002
2 ,8
7600000100011870001
8¡,8¢,10,14
7600000100011870002
150032
(1-55),(12-72)
7600000100004020001
177,179,187,(180-190)
7600000100004020002
1,2,(7-39),(14-16)
7600000100004070001
(41-45)
7600000100004070002
5,(2-12)
7600000100004460001
(7-57),(14-56)
7600000100004460002
(5-41),49/2,(14-60),4¡/8
7600000100004520001
1/2,3,4,2
7600000100004520002
(3-15),21,(2-14)
7600000100004830001
25,16,18
7600000100004830002
(107-113),108
7600000100004900001
115,115¡
7600000100004900002
(19-33),(18-36)
7600000100005230001
(3-17),(2-16)
7600000100005230002
(1-7),2 ,11,12,(15-17)
7600000100005960001
(33-41),4,6
7600000100005960002
7600000100006700001
7600000100006700002
20 ,22,(47-97)
7600000100006760001
7600000100006760002
16,17,21
7600000100007740001
(85-115),(86-118)
7600000100007740002
7600000100007850001
13,17,22
7600000100007850002
32,35/17,37/18,33
7600000100010580003
97,99,99 ,108
7600000100010580004
7600000100009910004
(7-67),(2-60),1,3,5,5/33
7600000100003640001
(75-99),(72-100)
7600000100003640002
150507
(11-89),(8-90)
7600000100007860001
(91-133),(92-152)
7600000100007860002
5001900100000540001
141009
5029
46234501000
5001900100000540002
141007
5001900100002320001
141001
5001900100002320002
141005
5001900100000870001
(2-34),(1-17)
5001900100001340001
141002
5001900100000640001
3,4,6/29
5001900100000960001
1,1 ,2,3 ,4,9-12
5001900100001210001
5001900100001860001
5001900100000870002
5001900100000580001
5001900100000100001
5001900100001230001
14-26,61
5001900100001890001
141004
5,7,(2-36)
5001900100002380001
5001900100001710001
5001900100000260001
5001900100001450001
2-4,6 ,8 
5001900100002310001
13-90
5001900100001380001
141006
5001900100001890002
5001900100000580002
5001900100000100002
5001900100000680001
5001900100000680002
5001900100001230002
141008
5001900100001140001
5001900100002060001
(19-27),(36-50)
5001900100001340002
5001900100001210002
9,9/2,11-76
5001900100000640002
5001900100002390001
1-12,16ª2
5001900100001380002
5001900100001450002
27-60
5001900100001890003
141013
13-44
5001900100001860002
141014
5001900100002380002
141017
5001900100000260002
16-40
5001900100001710002
(29-49),(52-88)
5001900100001340003
141018
5001900100002060002
5001900100001210003
5001900100001140002
5001900100001140003
141021
5001900100002390002
5000002800002010002
5077
46251000000
2,4,6,8,10,12,14,16,18
3800001400003680001
3800001400003680002
4200001000001370001
135-999
4200001000001370002
4200001000005930001
4200001000005930002
1/1,1/2,2/1,2/2,3/1,3/2,13,14,16,19
4200001200008890001
4-12,15,17-18,20-67
4200001200008890002
654004
1,2/1,2/2,3/1,3/2,4/2,5/1,5/2,6/1,6/2
4200001200010630001
4200001200010630002
,2,(4-46)
2700000100006500002
(67-71)
2700000100011310004
36,40,42,44,46,48,52,54,71,72,74,104,106
2700000100001480006
(43-71),(30-74)
2700000100008490003
(149-193),(94-100)
2700000100004070024
7800000000015550004
4200000600000410001
652845
4214
32428000000
4200000600000410002
4200000600000510001
652840
4200000600000510002
4200000600000570001
47-90
4200000600000570002
4200000600002680001
4200000600002680002
4200000600001150001
4200000600001150002
1-4,6-999
4200000600001240001
4200000600001240002
4200000600001390001
13,(17-61),(36-999)
4200000600001390002
2,9,11
4200000600001780001
1,3-8,10,12-999
4200000600001780002
1-5,7-18,20-999
4200000600002420001
6,19
4200000600002420002
652842
4200000600002720001
4200000600002720002
4200001600000080001
652878
32425000000
1,3-37
4200001600000080002
652880
4200001600000020001
652870
4200001600000020002
652877
24-39,(41-47)
4200001600000020003
4200001600000020004
652882
50-71
4200001600000020005
(1-9),4,8,10,12
4200001600000160001
6,14,16
4200001600000160002
4200001600000160003
20-32
4200001600000160004
33-36,(37-43)
4200001600000160005
652884
1-36,(37-43)
4200001600000180001
(40-62),(75-83)
4200001600000180002
652888
(64-130)
4200001600000180003
652873
4200001600000330001
652874
(1-9),12-26
4200001600000330002
1-11,(14-28)
4200001600000340001
(15-21),52-132
4200001600000340002
4200001600000410001
2,4,10-35
4200001600000410002
1-22,24,26,28,30
4200001600000620001
4200001600000620002
4200001600000750001
4200001600000750002
11-47
4200001600000750003
52-63
4200001600000750004
48-50
4200001600000750005
4200001600000790001
30,32,42
4200001600000790002
31,35-41,43-54
4200001600000790003
1-19,22
4200001600001030001
21,23-999
4200001600001030002
4200001600001500001
11,15,19
4200001600001500002
(12-34),37-45
4200001600001500003
4200001600001500004
47-73
4200001600001500005
2-15,(17-27)
4200001600001330001
4200001600001330002
16,29-39
4200001600001330003
4200001600001790001
4200001600001790002
4200001600001790003
4200001600001910001
(1-9),10-999
4200001600001910002
652881
4200001600001820001
15-20
4200001600001820002
4200001600001820003
4200001600000610001
9-12
4200001600000610002
17-22
4200001600000610003
4200001600001110001
4200001600001110002
(2-10),12,14,20,22
4303100014900030001
33235856010
(1-99),(24-100)
4303100022000130001
613112
33235856001
7600000100003460003
(72-164),(41-139)
3301000100000480001
602101
3319
17242501000
(25-43),14,14,16,18
3301000100000710001
(1-39),(2-70)
3301000100000480002
602102
3301000100000790001
(25-173),(16-148)
3301000100000750001
(38-166),(47-177)
3301000100000810001
(48-150),(59-187)
3301000100000560001
(27-129),(26-114)
3301000100000350001
3301000100000710002
3,4,5,11,13
3301000100000340001
3301000100000830001
3301000100000470001
3301000100000400001
23,25,28,29,30
3301000100000400002
602103
3301000100000350002
(25-99),(16-50),14,14,14
3301000100000540002
3301000100000540001
(38-74),(53-89)
3301000100000830002
3301000100000560002
(48-98),(61-99)
3301000100000790002
3301000100000750002
3301000100000810002
38,40
3301000100000470002
5400000400000080001
632335
5470
5451
50405000000
5400000400000080002
632331
21,22,23,24,25,26
5400000400000120001
632338
31,32
5400000400000120002
632334
(5-21),(12-18)
5400000400000200001
5400000400000200002
(1-45),(2-34)
5400000400000230001
(47-93),(36-92)
5400000400000230002
632332
(5-61),(2-48)
5400000400001500001
(63-87),(52-70)
5400000400001500002
5400000400000370001
632336
(21-27),(8-22),6
5400000400000370002
(1-149),(2-134)
5400000400000490001
(151-253),(136-196),198
5400000400000490002
(259-289),(198-224)
5400000400000490003
(1-79),(2-88)
5400000400000550001
(81-229),(90-200)
5400000400000550002
(231-309),(202-282)
5400000400000550003
5400000400000600001
(33-81),(95-199),(30-68),(88-176)
5400000400000600002
(201-341),(178-256)
5400000400000600003
(3-25),(2-10),(18-36)
5400000400000820001
(27-32),(40-52)
5400000400000820002
5400000400000760001
5400000400000760002
5400000400000780001
(15-75),(30-96)
5400000400000780002
5400000400000840001
(105-115),(94-100)
5400000400000840002
5400000400000900001
(25-97),(30-90)
5400000400000900002
(1-15),(2-38),(42-46)
5400000400000810001
5400000400000810002
5400000400001090001
(33-35),2,4/1,6
5400000400001090002
5400000400001180001
5400000400001180002
(1-81),(2-48)
5400000400001240001
(83-137),(147-151),(50-80)
5400000400001240002
(1-37),2,4,8
5400000400001270001
(39-119),(38-108)
5400000400001270002
(1-37),(10-42)
5400000400001300001
(39-111),(44-134)
5400000400001300002
5400000400001330001
(57-135),(60-140)
5400000400001330002
5400000600000350003
(1-17),(4-24)
5400000600001030001
(19-999),(26-998)
5400000600001030002
5400000600001130001
5400000600001130002
5400000600001470001
(55-999),(46-998)
5400000600001470002
5400000600001650001
632086
5400000600001650002
632087
5400000600000900001
(43-999),(46-998)
5400000600000900002
5400000600001780001
5400000600001780002
632085
(13-15),(2-28)
5400000600000910001
(17-999),(30-998)
5400000600000910002
7800000000007880001
7800000000007880002
(136-154)
5600000100002540009
(156-158)
5600000100002540010
(195-217)
5600000100002540011
17ª1
5600000100010180005
5600000100010490002
5600000100020510002
4303100014900010001
(1-53),(2-38)
1802200000100330001
427260
1821
94244551000
(55-150)
1802200000100330002
427263
(8-120)
1802200000100700001
427264
1802200000100700002
1802200000100500001
4-120
1802200000100500002
1802200000100840001
22-122
1802200000100840002
427261
7100000100003800003
300065
7100000100006330001
7100000100006330002
7100000100006350001
7100000100006350002
7100000100006360001
7100000100006360002
7100000100006370001
7100000100006400001
7100000100006340001
(2-6),(10-40)
7100000100006340002
(15-41),(26-46)
3600600100000170003
3600600100000190001
28,28,28,(30-42)
3600600100000190002
(24-74),(37-51)
3600600100000340001
3600600100000340002
(46-82),(51-69)
3600600100000570003
(164-198),(177-243)
3600600100000870001
(2-162),(1-175)
3600600100000870002
(95-107)
3600000100009970003
1800000100003950001
2,7,8
1800000100003950002
220,222,308,310
1800000100000800005
29,30,31,32
1800000100002740003
276
1800000100003910010
426070
7100000100006410001
7100000100006420001
7100000100006430001
7100000100006440001
(4-10),(16-66),91
7100000100006450001
7100000100006460001
4,8,12,(16-28)
7100000100006460002
1-16,18,20
7100000100006480001
301101
7100000100006490001
1-28,30,32
7100000100006500001
7100000100006510001
7100000100006520001
7100000100006530001
7100000100006540001
7100000100006550001
7100000100006560001
7100000100006570001
7100000100006580001
7100000100006590001
7100000100006600001
3100000100000140001
(33-99),(36-100)
3100000100000140002
3100000100000180002
(15-25),(8-24)
3100000100000180003
308033
(27-47),(26-50)
3100000100000180004
(20-43),(5-18)
3100000100000550003
(2-22),(5-9),(31-37)
3100000100001360001
3100000100001360002
(41-81),(34-50)
3100000100001410001
3100000100001410002
(39-44)
3100000100004370004
(1-25),(2-38)
3100000100005660001
0200100100011510003
0201300100000150001
(16-80)
0201300100003400001
0201300100003400002
452452
0201300100003400003
(119-159)
0201300100003400004
0201300100000690001
0201300100000690002
0201300100000680001
(50-90)
0201300100000950001
0201300100000950002
(67-93)
0201300100000950003
0201300100000950004
0201300100001140001
0201300100001140002
(10-998)
0201300100001360001
0201300100001360002
(10-110)
0201300100001380001
(9-113)
0201300100001380002
0201300100001380003
0201300100000190001
(82-88),(73-83)
0201300100000190002
0201300100000820001
0201300100000820002
0201300100001380004
452455
0201300100000360001
0201300100000360002
0202600100000910001
453204
0261
80420000000
0202600100000910002
453211
0202600100000900001
(16-30),(19-33)
0202600100000900002
453213
(89-111),(70-100)
0202600100001350001
453200
(40-64),(33-69)
0202600100001350002
(2-38),(23-29)
0202600100001350003
(75-87)
0202600100001350004
453215
(79-83)
0202600100001400001
453203
(85-129),(96-130)
0202600100001400002
0202600100001400003
0202600100001400004
(35-67),(74-94)
0202600100001400005
0202600100000330001
(23-51),(22-56)
0202600100000330002
453205
0202600100001220001
(21-27),(2-74)
0202600100001220002
(29-89),(76-96)
0202600100001220003
(52-64)
0202600100000240001
(87-107),(66-108)
0202600100000240002
0202600100000240003
(11-35),(16-20)
0202600100000240004
(23-45),(30-38)
0202600100001150001
(3-21),(26-28)
0202600100001150002
0202600100001900001
0202600100001900002
0202600100000170001
(23-59),(26-60)
0202600100000170002
0202600100000090001
(15-39),(20-44)
0202600100000090002
(41-61),(46-80)
0202600100000090003
0202600100001700001
0202600100001700002
0202600100001030001
0202600100001030002
0202600100000280001
(18-52),(15-39)
0202600100000280002
0202600100000340001
(37-87),(34-134)
0202600100000340002
0202600100000290001
(21-51),(24-52)
0202600100000290002
0202600100000290003
(59-89),(54-88)
0202600100000290004
0202600100000760001
0202600100000760002
(42-48),(35-47),60
0202600100000760003
0202600100000760004
(52-58),(62-68),63 
0202600100000760005
1,3,(2-16),18,18 
0202600100000520001
(5-59),(20-58),18¡
0202600100000520002
0202600100000250001
(2-20),(1-11),(15-21)
0202600100000250002
(1-63),(2-72)
0202600100000610001
74,(73-105)
0202600100000610002
0202600100000860001
(9-35),(20-112),132
0202600100000860002
(41-69),(114-130),(134-140)
0202600100000860003
(1-69),(10-88)
0202600100001000001
(94-116)
0202600100001000002
0202600100001650001
(46-78),(69-75)
0202600100001650002
(29-63),14 
0202600100001650003
0202600100001820001
(19-85)
0202600100001820002
0202600100000690001
(25-53),(26-40)
0202600100000690002
0202600100001880001
(21-39),(16-34)
0202600100001880002
(44-54),(43-63)
0202600100001770001
0202600100001770002
0200200000100620001
0200200000100620002
1,2,7,8
0200200000100810001
0200200000100810002
0205900100000030001
(26-98),(29-99)
0205900100000030002
0205900100000200001
(71-999),(68-998)
0205900100000200002
453402
0205900100000610001
(35-99),(36-98)
0205900100000610002
(1-17),(2-4)
0205900100000670001
(19-99),(6-98)
0205900100000670002
(1-45),(2-14)
0205900100000860001
(47-999),(16-998)
0205900100000860002
0205900100000910001
0205900100000910002
0205900100001030001
(25-99),(28-98)
0205900100001030002
(1-3),(2-22)
0205900100001090001
(5-99),(24-98)
0205900100001090002
(21-99),(26-98)
0205900100001320001
0205900100001320002
(2-164),(1-109)
0203300000100420003
453361
0262
0233
80239812001
(166-284),(111-205)
0203300000100420001
453360
0203300000100880001
0203300000100880002
1-30,34
0200000700002750012
453300
80423000000
(3-17),(4-10),14,26,28
0200000700000840005
(7-31),1,3,(8-16),(20-26)
0200000700000910001
(1-9),(19-23),15,22,26
0200000700002770001
(21-25),(12-14),(29-31)
0200000700001900001
(10-16),(30-34),2,5,(27-31)
0200000700001670001
(1-3),20 
0200000700002790001
(1-3),(2-8),11,13
0200000700000850001
0200000700000860001
(18-26),(30-42),15
0200000700001030001
(20-24),(30-32),46,38
0200000700002800001
(12-18),(17-21),33
0200000700000930001
453301
1-9,(10-12)
0200000700000680001
(1-7),(24-26)
0200000700002810001
5-7,1,11,14
0200000700000700001
0200000700000940001
0200000700002820001
0200000700002830001
0200000700001360001
0200000700000450001
0200000700002840001
0200000700000690001
(24-26),(3-5),30,34,10,14,18
0200000700000560007
453302
0200000700002870001
(5-9),17,18,8
0200000700002050001
(55-57),51
0200000700002890002
(1-7),(4-8),12
0200000700001040009
453303
0200000700002900001
0200000700002910001
0200000700000140001
(13-29),(1-9)
0200000700001940001
0200000700002020001
0200000700001920001
0200000700001430001
453305
0200000700001390001
453307
0200000700001440001
0200000700000440001
453308
0200000700001070004
0200000700001240001
(11-17),(14-16)
0200000700003000001
(1-9),36,(2-12)
0200000700003030001
453309
(1-3),(27-31),(16-22),9,23
0200000700001600001
0200000700003040001
(3-9),8
0200000700003000003
0200000700002890004
(28-30),(7-9),10,24
0200000700003040009
(8-12),(16-18)
0200000700002770006
(11-13),(25-112),(2-6),28
0200000700002770008
31-100
0200000700002750022
28 ,28¡,7 
0200000700000910014
(20-22),35,37,41,43
0200000700000930005
38,40,42
0200000700003030008
38 ,70,72
0200000700003030009
(11-89),(14-88)
0200000700003030010
0200000700001900009
0200000700001900011
(7-9),12
0200000700002820005
0200000700001670010
(3-25),(33-35),(18-28),4
0200000700001670011
32,39
0200000700002810003
(4-10),(14-16)
0200000700001430007
0200000700002840003
0200000700002800006
14,20,24
0200000700002770009
3200100005600000001
241517
3245
3207
15208842001
7400000100005000002
7400000100008850001
2300000202400010001
2300000202400020001
2300000202400030001
329-331,302-304
2300000202400040001
2300000202400050001
2300000201200000001
352925
(1-185),(2-118)
2300000100009400001
(1-25),(2-170)
2300000100009410001
(1-125),(2-128)
2300000100009430001
2300000100007130001
2302100100000080001
(73-137)
2302100100000080002
2302100100000080003
(68-132)
2302100100000080004
2302100100000150006
2302100100000190001
2302100100000190002
2302100100000190003
2302100100000190004
2302100100000310001
2302100100000310002
(17-61)
2302100100000310003
(10-62)
2302100100000310004
2302100100000320005
2302100100000320006
2302100100000320007
2302100100000320008
2302100100000480001
2302100100000480002
(13-185)
2302100100000480003
(12-142)
2302100100000480004
2302100100000520001
2302100100000520002
2302100100000520003
2302100100000520004
(43-97)
2302100100000520005
(106-152)
2302100100000520006
2302100100000700005
2302100100000700006
2302100100000800001
2302100100000800002
(81-135)
2302100100000800003
(116-136)
2302100100000800004
2302100100000980004
2302100100000980005
2302100100001240001
2302100100001240002
2302100100001240003
2302100100001240004
2302100100001690002
2302100100001690003
2302100100001690004
2302100100001690005
2302100100001940001
2302100100001940002
(53-171)
2302100100001940003
2302100100001940004
2302100100000040006
2302100100000040007
2302100000800180005
2302100000800200004
2302100000800380005
2302100000800440005
207
2302100000800440006
(64-124),200
2302100000800440007
4,5,6,7,9
2300000700002560001
1-990
5000500049800000001
141851
5007
46208834017
5000500049900000001
141825
46208822004
5000500048000000001
141895
46208813008
5000500003100000001
141822
46208864009
5000500003700000001
141893
46208816010
5000500048100000001
141862
46208852015
5000500004000000001
141892
46208852009
5000500004100000001
141890
46208855002
5000500004200000001
141829
46208831013
5000500004400000001
141840
46208802001
5000500004500000001
46208825007
5000500004600000001
141896
46208808004
5000500004900000001
141863
46208804011
5000500005100000001
46208834008
5000500005300000001
46208816027
5000500005400000001
141870
46208804002
5000500048200000001
46208000000
5000500005700000001
46208864021
5000500005800000001
141800
46208810013
5000500005900000001
46208834006
5000500006100000001
46208816028
5000500006200000001
46208810015
5000500006900000001
46208810016
5000500048400000001
46208810005
5000500007600000001
46208808001
5000500007900000001
141839
46208824010
5000500008200000001
141850
46208867005
5000500009000000001
46208810001
5000500009500000001
141820
46208870011
5000500009900000001
46208813002
5000500010100000001
46208831004
5000500048800000001
141891
46208852006
5000500010300000001
141833
46208837006
5000500010600000001
46208834011
5000500010800000001
46208852026
5000500011000000001
46208864022
5000500011300000001
46208831006
5000500011400000001
46208867003
5000500011500000001
141865
46208563001
5000500050300000001
46208834007
5000500012000000001
141894
46208828004
5000500012200000001
46208867012
5000500012800000001
46208554000
5000500013100000001
46208839027
5000500013700000001
46208825004
5000500014100000001
141823
46208870008
5000500014700000001
46208804012
5000500014800000001
46208804001
5000500014900000001
46208816006
5000500015100000001
141821
46208870013
5000500015400000001
46208849009
5000500015500000001
46208852029
5000500049300000001
46208804005
5000500049400000001
46208816009
5000500016100000001
46208825005
5000500016300000001
46208849003
5000500016400000001
46208852003
5000500016600000001
46208810003
5000500016700000001
46208834015
5000500016900000001
141860
46208557000
5000500017100000001
46208825001
5000500017200000001
141836
46208824014
5000500049600000001
46208816024
5000500017500000001
46208825008
5000500017600000001
46208824006
5000500017700000001
46208824007
5000500018300000001
46208864017
5000500018600000001
46208837002
5000500018700000001
46208849007
5000500018900000001
46208870003
5000500019000000001
46208864007
5000500019300000001
141880
46208807015
5000500019400000001
46208839007
5000500019500000001
46208831001
5000500019700000001
46208839028
5000500020100000001
46208802004
5000500050200000001
46208870005
5000500020500000001
46208837001
5000500020700000001
141801
46208822014
5000500020900000001
46208810006
5000500021500000001
46208824023
5000500022100000001
141834
46208837008
5000500022300000001
46208804004
5000500022600000001
46208804006
5000500023000000001
46208808011
5000500023100000001
46208839011
5000500023400000001
141832
46208846010
5000500023900000001
46208839008
5000500024400000001
46208822002
5000500024500000001
46208846019
5000500024700000001
46208834012
5000500024900000001
46208808010
5000500025000000001
46208810012
5000500025300000001
46208864012
5000500025400000001
46208824019
5000500025600000001
46208816022
5000500026100000001
46208867013
5000500026300000001
46208822008
5000500027200000001
46208563000
5000500027300000001
46208849002
5000500027400000001
46208816012
5000500027700000001
46208828019
5000500028100000001
46208804003
5000500028200000001
46208822013
5000500028500000001
46208816013
5000500028600000001
46208867007
5000500028900000001
141830
46208861001
5000500011900000001
46208816001
5000500029200000001
46208824012
5000500028700000001
46208852017
5000500029400000001
46208839025
5000500029600000001
46208813005
5000500046700000001
46208813006
5000500030100000001
46208852023
5000500030300000001
46208864001
5000500030400000001
46208822011
5000500030500000001
46208822001
5000500030700000001
46208849001
5000500051200000001
46208849006
5000500030900000001
46208849008
5000500031000000001
46208824021
5000500031100000001
46208824003
5000500031300000001
46208810007
5000500050700000001
46208834002
5000500032400000001
46208810008
5000500032500000001
46208852001
5000500032900000001
46208852022
5000500033000000001
46208828020
5000500033700000001
46208810011
5000500033900000001
46208861015
5000500034500000001
46208824024
5000500034800000001
46208825003
5000500035000000001
46208807001
5000500035300000001
46208813007
5000500035400000001
46208870017
5000500035500000001
46208864005
5000500036300000001
46208852020
5000500049500000001
46208870001
5000500030800000001
46208813001
5000500036700000001
46208870019
5000500036800000001
46208816021
5000500038100000001
141897
46208828006
5000500038300000001
46208804010
5000500038400000001
46208846003
5000500039000000001
46208824018
5000500039300000001
46208816011
5000500039500000001
141811
46208822003
5000500040000000001
46208810010
5000500040200000001
46208870004
5000500040400000001
46208864010
5000500040500000001
46208852008
5000500041000000001
46208831010
5000500041100000001
5000500041600000001
46208828002
5000500046900000001
46208846002
5000500041900000001
46208824022
5000500042100000001
46208831011
5000500042500000001
46208837007
5000500042800000001
46208816004
5000500043100000001
5000500043400000001
46208852012
5000500043600000001
46208867001
5000500044600000001
46208867006
5000500045000000001
46208816023
5000500045100000001
46208831005
5000500045500000001
46208861010
5000500045600000001
46208852024
5000500045800000001
46208870006
(4-32),(1-57)
4200000900010840001
(18-998)
4200000900007120003
4200000900008420003
(18-36)
4200000900006130006
(32-998),(9-999)
4200000900000640002
4200000900014360001
4200000900014360002
7600000100002610001
(19-21),31 ,37,41,45
7600000100002610002
1áâà14,1áâà15,1áâà16,2
7600000100009910005
37ª2,39,41,41ª3
7600000100008580005
82,84,88,92,96,96,99,(100-104)
5902800100001150001
617830
5957
57257501000
(1-65),(71-73),(79-81)
5902800100000400001
617831
5902800100000190001
68,72,76,78,80
5902800100000070001
617832
(1-11),(2-12),14,22
5902800100000010001
(1-41),(2-60)
5902800100000080001
5902800100000500001
5902800100001180001
(29-41),(34-38)
5902800100000090001
5902800100000620001
617834
(71-113),(42-66)
5902800100000070002
5902800100000070003
5902800100000400002
5902800100001150002
21-32
5902800100000190002
5902800008100010001
617833
57257843008
17,19,23,25,27,29,34,36,38
5902800100000010002
(43-65),(62-78)
5902800100000080002
(71-81),(74-80)
5902800100001180002
5902800100000090002
5200000100005650010
(2-6),(3-7),45
1802500002400000001
427105
1809
94250845003
(106-114),120,118,122,124,126,130
7200000100003080006
2,4-8
2701100002200060001
682370
2720
2714
08228000018
1,4,7,10-12
2701100002200050001
2-6,8
2701100002200040001
2701100002200030001
2701100002200020001
10-12,20,23,25-27
2701100002200010001
7100000100006610001
7100000100006620001
7100000100006620002
7100000100006630001
7100000100006640001
7100000100006650001
1-11,13,15,17
7100000100006660001
7100000100006670001
7100000100006680001
7100000100006690001
7100000100006700001
7100000100006700002
7100000100006710001
7100000100006720001
7100000100006730001
7100000100006740001
7100000100006750001
7100000100006750002
7100000100006440002
5200000100017070001
5200000100017070002
7601400100000870001
82-86
7601400100000870002
7400000900003300006
2001900000800010001
366413
2034
2019
96291811001
2001900000800020001
2001900000900010001
96291821001
2001900000900020001
1-159
2001800000100000001
366400
2018
96228822001
170
1800000100000670008
25-30
6900300100000950003
6600000100005220005
6600000100003270001
6600000100003270002
6600000100007270001
6600000100007270002
2¥
6600000100006680001
(1-999),(4-998),2 ,2¡
6600000100006680002
1801300011300010001
427574
94224865001
1801600003200080001
427661
94230877001
1801600003200070001
1801600003200060001
1801600003200050001
1801600003200040001
1801600003200030001
1801600003200020001
1801600003200010001
1801600000400020001
427665
94230811001
1801600000400050001
1801600000400070001
1801600000400060001
1801600000400100001
1801600000400040001
1801600000400030001
1801600000400010001
1801600002800010001
427654
94230855001
1801600002800020001
1801600002800030001
1801600002800040001
1801600002800050001
1801600002800060001
1801600002800070001
1801600002800080001
1801600001400010001
427664
94230830001
1801600001400020001
1801600001400030001
1801600001400040001
1801600001400050001
1801600001400060001
3-26
1801600001400070001
1801600001400080001
1801600001400090001
1801600001400100001
1801600001400110001
2-3
1801600001400120001
1801600001400130001
1801600001400140001
1801600001400150001
1801600001400160001
1801600001400170001
1801600001400180001
1801600001400190001
1801600001400200001
4-13
1801600001400210001
1801600001400220001
1801600001400230001
1801600001400240001
1801600001400250001
1801600001400260001
1801600001400270001
1801600001500050001
427660
94230833001
1801600001500010001
1801600001500020001
1801600001500030001
1801600001500040001
1801600001500080001
1801600001500060001
1801600001500070001
1801600001500090001
1801600001700010001
427656
94230844001
1801600001700020001
1801600001700030001
1801600001700040001
1801600001700050001
1801600000600030001
427662
94230822001
1801600000600020001
1801600000600010001
7-71
1801600000600040001
2-38
1801600000600050001
1801600007300000001
427650
94230805005
1801600007100000001
94230833014
1801600007000000001
94230833002
1801000006400030001
427133
94218835001
1801000006400020001
1801000011000030001
94218835005
1801000011000040001
1801000011000020001
1801000008900000001
94218835004
1801000001400000001
94218835003
1801000010300000001
94218835007
1801000010300000002
3 
1801000010300000003
1801000010300000004
1801000010300000005
1801000010300000006
1-106
1801000007000060001
427153
94218840001
1801000007000020001
1801000007000030001
1801000007000010001
1801000007000050001
1801000007000040001
1801000007000070001
2-41
1801000005800060001
427156
94218840002
1801000005800070001
1801000005800090001
1801000005800080001
1801000005800100001
1801000005800110001
1801000005800030001
1801000008400020001
94218840012
1801000008400010001
1801000006500000001
94218840005
1801000001300000001
94218840006
1801000007800000001
94218840011
1801000004700000001
94218840007
1801000003200000001
94218840008
1801000011200000001
94218840009
1801000006200000001
94218840010
1801000005400000001
427154
94218840004
1801000010900000001
94218840013
1801000004000020001
427135
94218827001
1801000004000060001
1801000004000090001
1801000004000040001
1801000004000080001
1801000004000070001
1801000004000030001
1801000004000010001
1801000004000050001
1801600000100120001
94230866001
1801600000100090001
1801600000100070001
1801600000100030001
1801600000100290001
1801600000100300001
1801600000100060001
1801600000100270001
1801600000100010001
1801600000100190001
1801600000100250001
1801600000100110001
1801600000100340001
1801600000100180001
1801600000100430001
1801600000100100001
1801600000100210001
1801600000100080001
1801600000100370001
1801600000100230001
1801600000100220002
1801600000100310001
1801600000100320001
1801600000100390001
1801600000100170001
1801600000100130001
1801600000100020001
1801600000100150001
1801600000100360001
1801600000100040001
1801600000100050001
1801600000100280001
1801600000100140001
1801600000100400001
1801600000100260001
1801600000100380001
1801600000100410001
1801600000100240001
1801600000100160001
1801600000100330001
1801600000100480001
1801600000100450001
5200000100004550001
1-19,21-999
5200000100004550002
3200100011500000001
241518
15208854001
(1-25),(2-18),196
5400000100008420001
19,(29-999)
5400000100008420002
630040
5400000100015560001
5400000100015560002
7800000000009670007
3100000100001150001
(33-151),(36-128)
3100000100001150002
(67-89),(60-88)
3100000100001740003
3100000100005690001
(2-84),(5-91)
3100000100005690002
(2-90),(5-67)
3100000100003980001
(183-343),(198-236)
3100000100003980002
(345-793),(238-646)
3100000100003980003
(2-100),(1-68)
3100000100005700001
(1-167),(2-72)
3100000100005710001
(169-629),(74-484)
3100000100005710002
1801400000100070001
427710
94226551000
(2-34),35-117
1801400000100070002
427712
1801400000100520001
43-65
1801400000100520002
(197-219)
2200000100004690015
219,221,221,221
2200000100004690016
(223-275)
2200000100004690017
2200000100001090001
(13-39),(16-106)
2200000100001090002
(34-56),(53-73)
2200000100001220001
(77-91),(58-92)
2200000100001220002
(2-44),53-75
2200000100001660001
(35-51)
2200000100001660002
(59-67),(144-156)
2200000100001690003
656006
125,(162-178)
2200000100001690004
210,(129-139)
2200000100001690005
147
2200000100001690006
(2-88),(1-49)
2200000100001860001
90-146,(51-87)
2200000100001860002
(5-11),(16-38)
2200000100008560001
2200000100008560002
148
2200000100002070006
150,157
2200000100002070007
(151-153)
2200000100002070008
2200000100008480001
2200000100008480002
2200000100002780007
46,50,60
2200000100003000004
(16-78),(25-77)
2200000100003330008
91
2200000100003400003
656018
2200000100004810005
2200000100003590019
(199-203)
2200000100003590020
2200000100003790001
656024
1/1,1/4,(3-39),(2-22)
2200000100003790002
2200000100003790003
656021
(85-99)
2200000100003840012
2200000100004110007
2200000100004300004
2200000100004300005
2200000100004330001
(1-7),(16-34)
2200000100004330002
(3-75),(2-70)
2200000100004630001
2200000100004630002
656047
2200000100008270001
2200000100008270002
656059
(81-169),(58-136),(142-144)
2200000100008270003
(138-140),(146-266),(171-245)
2200000100008270004
(88-176)
2200000100004700003
(3-5),(4-6)
2200000100004760001
1,2,(8-12),(9-11)
2200000100004760002
(179-193),(234-264)
2200000100004860009
2200000100005150001
35-141,208-388
2200000100005150002
(37-41),26
2200000100005160001
2200000100005200001
(46-50),(57-83)
2200000100005200002
(5-33),(10-40)
2200000100005650001
(48-70),(49-55)
2200000100005650002
(74-88),67
2200000100005650003
33,35
2200000100005670006
(29-97),(32-78)
2200000100005920005
29,40
2200000100005930003
2200000100006240004
(1-33),(2-48),50
2200000100006270002
2200000100006830005
5,7,(8-30)
2200000100008070001
(17-59),(32-68)
2200000100008070002
2200000100009380001
28,(7-25)
2200000100009380002
7800000900001930001
(4-12),7,9,13,(16-26),19,21
6900000100002290001
(1-5),2
6900000100002290002
5,7-21,23,43,45ª2,55,(62-68)
6900000100002370001
6900000100002370002
(1-11),15,17,(21-27),2,6
6900000100003880001
10,(14-22)
6900000100003880002
6,(7-11),(17-21)
6900000100004580001
6900000100004580002
(49-59),(63-73),(77-97)
6900000100004740001
28,(32-38),56,58,62
6900000100004740002
8,10,14,32,34
6900000100006510001
(1-7),13,15,29,34ª1,43
6900000100006510002
42
6900000100005870001
1-17,19-23,42
6900000100005870002
(2-10),1,5,9,11
6900000100007160001
3,15,16
6900000100007160002
1-15,17-44
6900000100004240003
2-12,(14-18)
6900000100005290005
68,69,(70-74),76-79,81-83,(85-97)
6900000100004240002
20ª1
6900000100002870003
(13-19),21-29,(30-56)
6900000100002870004
(12-28),36
6900000100000910001
(17-33),(37-47),24 ,26 
6900000100000910002
40 
6900000100002720001
22 ,(77-79),81 ,83 ,85,136
6900000100002720002
38¢,(44-48),(81-99),98,(103-107)
6900000100002720003
6900000100002720004
8¡,10,18,20,63ª1
6900000100002720005
6900000100002720006
8,(19-23),(41-49),(65-69)
6900000100002720007
(72-78),79-99,(101-113),106,112,118
6900000100006470005
19-33,(34-38)
6900000100007670002
43/24
6900000100007670003
9,11-18
6900000100007670004
6900000100007670005
4,5,6,15,16,18
6900000100009370001
170017
21 ,22,23,24,25,27,29
6900000100009370002
170025
6900000100000530001
170027
39 
6900000100000530002
200,202
6900000100001410003
2,4,6,10,12,14
6900000100009510001
6900000100009510002
6900000100002430001
7-44
6900000100002430002
71 
6900000100002800003
(20-46),48
6900000100003530002
1-10,12,13,18,157
6900000100009710001
170032
20,22,24 
6900000100009710002
1,2,4,27,(20-32),38,44,46,54
6900000100004520001
72-82,90-92
6900000100004520002
13,31,33,84,86,88/2,110,142-152
6900000100004520003
124,156,164,177 ,178,7
6900000100005520004
(2-22),154/24
6900000100006850001
6900000100006850002
6600000100001280001
3700300100000420001
3700300100000420002
3700300100000240001
3700300100000240002
3700300100002770001
3700300100002770002
3700300100002780001
42-44
3700300100002780002
5800000100004080003
440000
5900000100009900008
3400000100005630001
3400000100005630002
(1-79),(4-88)
3400000100028320001
(1-21),22¡
3400000100024750001
20,22,22 ,22£,22¤,22ª,(24-60)
3400000100024750002
3400000100026440004
(19-25),(35-47),(55-71)
3400000100007730001
(124-182),(153-207),217
3401800100001320001
(2-120),(1-151)
3401800100001320002
(88-102),(79-103)
3401800100001580001
(2-86),(1-77)
3401800100001580002
(26-38),(13-121),60
3401800100002190001
3401800100002190002
(54-62),(67-85)
3401800100002260001
(2-52),(9-65)
3401800100002260002
3401800100002280001
(66-82),(63-81)
3401800100002280002
(14-28),(19-27)
3401800100002330001
3401800100002330002
3401800100002500001
(64-166),(21-99)
3401800100002340001
403341
(2-62),(1-19)
3401800100002340002
(6-68),(9-75)
3401800100002740001
(84-130),(65-105)
3401800100002820001
(2-82),(1-63)
3401800100002820002
(37-39),(108-184)
3402100100000430001
403951
3419
18238501000
(95-187),(96-208)
3402100100000420001
(69-131),(82-132)
3402100100000440001
3402100100000330001
3402100100000350001
(63-85),(70-114)
3402100100001010001
3402100100000460001
403952
(1-109),(2-96)
3402100100000080001
(1-133),(2-128)
3402100100000640001
3402100100000850001
(1-101),(2-134)
3402100100000070001
(1-111),(2-126)
3402100100000060001
3402100100000660001
3402100100000870001
3402100100000650001
(63-121),(68-98)
3402100100000700001
319
3402100100000620001
(37-323),(34-314)
3402100100000880001
403954
(77-217),(76-202)
3402100100000920001
(11-145),(2-126)
3402100100000890001
(49-93),(56-84)
3402100100000330002
(17-61),(20-56)
3402100100000870002
403955
(113-125),(118-138)
3402100100000850002
(113-137)
3402100100000060002
(51-61),(50-64)
3402100100000700002
(1-93),(2-94)
3402100100000420002
403958
(1-35),(2-106)
3402100100000430002
3402100100000440002
(1-61),(2-68)
3402100100001010002
3402100100000890002
3402100100000920002
3402100100000880002
(46-78),(43-67)
3402100100000350002
(97-109),(88-116)
3400000100001420002
3400000100023770002
(3-57),(2-70)
3400000100016380001
3400000100016380002
19,(33-35),(32-38)
3400000100006290002
(29-65),(32-52)
3401800100001490001
3401800100001490002
3401800100000320001
(63-71),(62-84)
3401800100000320002
2-55
3401800100001100001
3401800100001100002
(45-87),(48-72)
3401800100001110001
3401800100001110002
3401800100001160001
(41-59),(62-74)
3401800100001160002
3401800100000010003
3401800100001170001
3401800100001170002
3401800100001180001
(3-91),(2-92)
3401800100001210001
94-208
3401800100001210002
403344
3401800100001590001
62-74
3401800100001590002
(2-88),108,(1-105)
3401800100001640001
(90-108),(107-151)
3401800100001640002
(26-36),(19-41)
3401800100001710001
(38-42),(43-51)
3401800100001710002
(72-112)
3401800100001710003
3401800100001710005
(62-70)
3401800100001710006
(114-134),(57-73),81,85
3401800100001710007
3401800100001710008
3401800100001880001
(2-12),(22-30),(31-47)
3401800100001880002
10-75
3401800100003020001
3401800100003020002
3401800100003940001
6,6 ,7,10,19
3400000100026510003
7,(2-92)
3400000100027800002
99,(94-154)
3400000100027800003
3403200100001520001
3403200100001520002
(67-133)
3403200100000210004
(85-125),(92-122)
3403200100000640003
(63-75),(50-60)
3403200100001110003
3,4,6,8,10 ,12,14,15,16/73,19,142
5003400100001730001
142800
46253501000
5500000103000000001
644061
7800000000007880003
3801800100000450001
665904
3837
25234501000
38-200
3801800100000450002
665903
3801800100000640001
58-100
3801800100000640002
3801800100000960001
50-86
3801800100000960002
3801800100001070001
17-100
3801800100001070002
5600000100002940012
(3-13),(2-22)
5600000400042120001
25,27,29,30-38
5600000400042120002
1,3-5,7,9-99
5600000400051390001
5600000400006060001
1,(2-200),(15-201)
5600000400006060002
5600000400006090001
462410
(20-100)
5600000400006090002
462427
5600000400009480001
462416
7-30
5600000400009480002
5600000400012840001
11-35
5600000400012840002
462401
(82-234),(139-265)
5600000400015000001
(2-80),(5-135)
5600000400015000002
5600000400031020001
(3-69),(6-72)
5600000400031020002
5600000400033390001
18-100
5600000400033390002
5600000400036180001
5600000400036180002
5600000400037200001
5,(8-12)
5600000400037200002
1802200000100850001
1-200
1802200000100850002
1802200000100500004
7800000002201730001
1900000100002100004
5601800000200010001
461662
53243802002
5601800000200020001
5601800005800010001
53243802001
5601800005800020001
5601800005800030001
5601800005800040001
5601800005800050001
5601800005800060001
5601800001700010001
53243802003
5601800001700020001
5601800001700030001
5601800001700040001
5601800001700050001
5601800001700060001
5601800001700070001
5601800001800010001
461651
53243807001
5601800001800020001
5601800001800040001
5601800001800030001
5601800001800050001
5601800004600010001
53243807002
5601800004600020001
5601800004600030001
461652
5601800000400030001
461674
53243804001
(22-60),(21-59)
5601800000400030002
5601800000400040001
(1-29),(2-52)
5601800000400020001
(1-135),(2-152)
5601800000400010001
(7-37),(6-34)
5601800001300010001
53243804002
5601800006800020001
53243804003
5601800006800030001
5601800006800010001
5601800007400020001
53243804004
(1-81),(2-66)
5601800007400010001
(3-67),(2-76)
5601800002600010001
461658
53243813001
5601800002600020001
5601800002600030001
5601800002600080001
5601800002600070001
5601800002600050001
5601800002600040001
5601800002600060001
5601800002600090001
(1-213),(2-180)
5601800006100010001
461659
53243813004
5601800002100010001
53243813002
5601800002400020001
2-80
5601800002200010001
53243810002
1-110
5601800004800010001
461664
53243810004
5601800004800020001
5601800007600050001
(1-77),(2-50)
5601800007600010001
(58-86)
5601800007600010002
5601800007600020001
5601800007600040001
5601800007600060001
5601800007600070001
5601800000900010001
53243816006
5601800003300010001
53243816004
(1-39),(2-24)
5601800002700010001
53243816003
(1-27),(2-27)
5601800005100010001
461682
53243819001
5601800005100030001
5601800005100020001
5601800005100050001
5601800005100040001
5601800004900010001
53243819004
5601800002500010001
53243819002
5601800003400040001
461679
53243819006
5601800003400010001
5601800003400030001
5601800003400020001
5601800003200010001
53243819003
(1-56),(2-64)
5601800003500010001
461656
53243822001
5601800003500030001
5601800003500040001
5601800003500020001
5601800001500010001
461657
53243822002
5601800001500020001
5601800001500030001
5601800001600010001
53243822003
5601800004100020001
53243822004
(3-49),(2-50)
5601800004100030001
5601800004100010001
5601800004700010001
53243822005
5601800007200010001
53243822006
5601800003100010001
461666
53243825003
5601800005500010001
461667
53243825004
5601800004200010001
461654
53243828001
5601800004200020001
5601800004200030001
5601800001200010001
53243828003
5601800001400010001
53243828002
5601800004300010001
53243828004
5601800000300010001
53243834002
5601800005900010001
53243840001
5601800005900020001
5601800005900050001
5601800005900030001
5601800005900070001
5601800005900060001
5601800005900040001
5601800003600020001
461660
53243840002
5601800003600010001
1-51,67
5601800001100010001
461673
53243843002
3-31
5601800001100020001
5601800006300010001
461675
53243843005
5601800006400070001
53243843001
5601800006400030001
5601800006400020001
5601800006400040001
1-27,76,77
5601800006400050001
5601800006400060001
(1-129),(2-130)
5601800006400010001
5601800002000010001
53243843003
5601800003700010001
53243843004
5601800007100010001
53243843006
5601800006600020001
461676
53243845001
5601800006600010001
5601800006600030001
5601800006600040001
5601800006600050001
5601800006600060001
5601800006600070001
5601800006600080001
5601800006600090001
67-70
5601800007300060001
53243849001
71-79
5601800007300030001
55-65
5601800007300050001
18-44
5601800007300020001
5601800007300040001
80-97
5601800007300020002
5601800007300070001
5601800000100010001
461670
53243837001
5601800000100020001
5601800000100030001
5601800000100040001
5601800000100050001
5601800000100060001
5601800000100260001
5601800000100070001
(1-137),(2-136)
5601800000100080001
5601800000100270001
5601800000100090001
5601800000100100001
5601800000100110001
5601800000100120001
5601800000100130001
(1-23),(2-38)
5601800000100140001
5601800000100150001
5601800000100160001
5601800000100340001
5601800000100170001
5601800000100310001
5601800000100180001
(1-61),(2-50)
5601800000100190001
5601800000100280001
5601800000100200001
5601800000100210001
5601800000100320001
(1-81),(2-116)
5601800000100220001
5601800000100290001
5601800000100230001
5601800000100240001
5601800000100330001
5601800000100250001
5601800000100250002
5601800000100350001
5601800006200020001
461677
53243837005
5601800006200030001
5601800006200050001
(1-31),(2-46)
5601800006200040001
5601800006200010001
5601800006200060001
(1-149),(2-174)
5601800006200070001
(1-65),(2-66)
5601800000600010001
53243837003
5601800000500010001
53243837002
(1-59),(2-44)
5601800005600010001
53243837006
5601800005000010001
53243837004
5601800005300010001
461661
53243831001
(1-27),(4-26)
5601800005300100001
5601800005300190001
5601800005300090001
5601800005300140001
5601800005300040001
5601800005300080001
5601800005300200001
5601800005300020001
5601800005300150001
5601800005300120001
5601800005300130001
5601800005300070001
5601800005300050001
5601800005300210001
5601800005300030001
5601800005300180001
5601800005300060001
5601800005300170001
5601800005300160001
5601800005300110001
5601800005300220001
(3-29),(2-28)
5601800000800010001
53243831002
5601800007000030001
53243831003
5601800007000020001
5601800007000010001
5600000100000930004
(117-163)
5600000100000930005
1,7,9,11,2,4,6
5600000300000040001
(3-23),(2-34)
5600000300000060001
462354
5600000300000070001
5600000300000090001
5600000300000210001
5600000300000210002
5600000300000110001
5600000300000120001
(1-9),(2-16),20
5600000300000130001
5600000300000150001
5600000300000160001
5600000300000190001
5600000300000220001
(3-45),(2-28)
5600000300000230001
5600000300000250001
5600000300000270001
5600000300000290003
462356
5600000300001200001
5600000300000310001
5600000300000300001
5600000300000320003
5600000300000330001
5600000300000340001
(1-175),(2-170)
5600000300000350001
5600000300000360001
5600000300000360002
(4-26),(3-21)
5600000300001150001
5600000300000410001
5600000300000420001
5600000300000440001
5600000300000450001
5600000300000460001
5600000300000480001
16-62
5600000300000500001
(3-65),(2-72)
5600000300000510001
5600000300000520001
(13-53),(40-64)
5600000300000540001
5600000300000550001
5600000300000570001
5600000300000580001
5600000300000590001
5600000300000640001
5600000300000260001
5600000300000670001
5600000300000680001
5600000300000690001
5600000300000700001
5600000300000710001
(3-65),(8-38)
5600000300000720001
5600000300000740001
5600000300000750001
1-124
5600000300000760001
5600000300000790001
5600000300000810001
2-72
5600000300000820001
5600000300000830001
5600000300000850001
5600000300000860001
5600000300000890001
5600000300000900001
(3-53),(2-26)
5600000300000910001
5600000300000940001
4,6,8,10
5600000300000960001
3,5,7,9
5600000300000960002
7,9,10,12
5600000300000970001
5600000300000980001
3-7,9,12,18
5600000300000470001
5600000300000990001
3,5,7,13,15
5600000300001000001
2-20,24,26,30,36,40,42
5600000300001000002
(3-55),(2-46)
5600000300000030001
5600000300001110001
(1-11),(2-38)
5600000300000540002
(23-93),(30-88)
5600000300000610001
5600000300000610002
1,6,8,10,12,14,24,26,28,36
5600000300000610003
(39-139),(2-166)
5600000300000620001
5600000300000620002
5600000300001210001
462456
5600000300001220001
(3-35),(8-28)
5600000300000800001
(44-64),57,59
5600000300000800002
4800000100001590003
4800000100001590004
(74-106),(110-118),105
4800000100001590005
398016
(63-103),107,107/1
4800000100001590006
(109-139),107/2,108
4800000100001590007
398043
(143-161),175
4800000100001590008
(131-133),(145-161),(148-158)
3400000200000310011
3400000200000010005
3400000200000050004
3400000200000340005
(1-209),(2-266)
3400800100000150001
403791
3407
18212501000
(268-998),(213-999)
3400800100000150002
403792
3400800100000260001
3400800100000260002
3,11
3400800100000290001
(2-998),(5-9),(13-999)
3400800100000290002
(1-57),(2-62)
3400800100000310001
3400800100000310002
3400300000100300001
404062
3402
18204551000
3400300000100300002
404061
3400300000100310001
3400300000100310002
3400300000100080001
3400300000100080002
3400300000100010001
42-999
3400300000100010002
3400300000100160001
3400300000100160002
3400300000100020001
3400300000100020002
3400300000100070001
3400300000100070002
(42-999),(23-999)
3400300000100030001
(2-40),(1-21)
3400300000100030002
3400300000100190002
57,57¨,57¤,57è,57à,63,106ª,106¦
3400000100027720004
400097
(1-73),(2-70)
3400000100013770001
(161-167),(140-154)
3400000100013770002
(75-159),(72-138)
3400000100013770003
3400000100014070001
(177-191),(182-192)
3400000100014070002
(89-175),(90-180)
3400000100014070003
(45-51),(60-62)
3400000100014290001
3400000100014000001
(142-148),(139-141),145
3400000100014000002
3400000100013320001
3400000100013320002
(69-75),(92-104)
3400000100012790002
(7-31),(12-38)
3400000100012750001
3400000100012750002
(5-61),(2-38)
3400000100015190001
(65-129),(48-110)
3400000100015190002
3400000100013640001
2,3,8
3400000100013640002
3400000100013640003
(1-101),(4-124)
3400000100014780001
(126-132),134 
3400000100014780002
(1-39),(2-48),43,45
3400000100013830001
(47-77),(50-100)
3400000100013830002
(35-71),(36-70)
3400000100015120001
(5-31),(10-34)
3400000100015120002
(11-37),(22-46)
3400000100013590001
3400000100013590002
(81-137),(84-112)
3400000100015170001
(3-79),(4-82)
3400000100015170002
(17-45),(16-42)
3400000100013710001
3400000100013710002
41,(40-46)
3400000100014490001
(25-31),(18-38),19
3400000100014490002
(1-99),(2-68)
3400000100013740001
(101-105)
3400000100013740002
3400000100014540001
(135-145),(136-148)
3400000100014540002
3400000100015060001
(43-65),(38-40)
3400000100015060002
(25-61),(50-94)
3400000100013210001
3400000100013210002
(3-47),(4-70)
3400000100013720001
(137-145),(72-168)
3400000100013720002
(17-41),(18-44)
3400000100013310001
3400000100013310002
2,(10-52),(1-23)
5500000100005460001
2,2ª1,(4-8)
5500000100005460002
(1-101),(2-138)
5600900003800090001
461727
5622
53207840001
5600900003800040001
5600900003800100001
5600900003800020001
(1-103),(2-52)
5600900003800010001
5600900003800070001
5600900003800050001
5600900003800030001
(1-109),(2-64)
5600900004000010001
53207840003
5600900003900010001
53207840002
(1-11),(2-48)
5600900003900020001
5600900003900030001
5600900003900100001
(23-43),(2-22)
5600900002400010001
461719
53207825001
5600900002400020001
5600900002400030001
5600900002400030002
5600900002400040001
5600900002400050001
5600900002400060001
5600900002600010001
53207825004
(1-27),(2-36)
5600900002500010001
53207825003
(1-13),(2-62)
5600900002500020001
5600900002700010001
53207825002
5600900002700020001
5600900002700030001
5600900002700030002
(1-103),(2-112)
5600900003600020001
461712
53207837001
5600900003600030001
5600900003600040001
5600900003600070001
5600900003600080001
5600900003600090001
5600900003600100001
5600900003600110001
5600900003600120001
5600900000900010001
461715
53207813001
5600900000900020001
5600900000900030001
5600900000900040001
5600900000900050001
5600900000900060001
5600900000900070001
5600900001000010001
53207813002
5600900001000020001
5600900001000030001
5600900001000040001
(1-35),(18-34)
5600900002200020001
461724
53207822002
(1-109),(2-72)
5600900002200040001
(3-59),(2-140)
5600900002100010001
53207822001
5600900002100020001
(1-113),(2-36)
5600900002100070001
5600900002100040001
(3-19),(2-36)
5600900002100080001
5600900000500070001
461713
53207802001
(31-49)
5600900000500070002
5600900000500070003
5600900000500010001
5600900000500020001
5600900000500030001
5600900000500040001
5600900000500050001
5600900000500080001
5600900000500090001
(1-101),(2-88)
5600900004100010001
461726
53207843001
5600900004100020001
(1-27),(2-60)
5600900004100030001
5600900004100040001
(1-89),(2-18)
5600900004200010001
53207843002
5600900004300010001
53207843004
5600900001900010001
461710
53207819001
5600900001900010002
5600900001900020001
5600900001900030001
5600900001900050001
5600900001900060001
5600900001900070001
5600900001900080001
1,3,9,4,6
5600900001900090001
2-16
5600900002000010001
461716
53207819004
3,7,9,4,8
5600900002000020001
5600900005300010001
461706
53207848001
5600900005300030001
5600900005300040001
5600900005300020001
5600900005300050001
5600900005300060001
(15-63)
5600900005300060002
5600900005300070001
2-66,70
5600900005400010001
53207848003
5600900005500010001
461703
53207848002
5600900005500020001
5600900005500030001
5600900001500010001
461701
53207818001
5600900001500020001
(1-65),(2-78)
5600900001500030001
5600900001500040001
5600900001700010001
53207818003
5600900001800020001
53207818002
(1-7),4
5600900001600010001
53207818004
(1-233),(2-218)
5600900003300010001
461704
53207834001
5600900003300020001
5600900003300030001
5600900003400010001
53207834002
5600900003400020001
5600900003400030001
(1-151),(2-94)
5600900003400050001
5600900003400060001
5600900003500030001
53207834003
5600900001200010001
461707
53207815001
5600900001200050001
5600900001200020001
5600900001200030001
5600900001200040001
5600900001200040002
5600900001300010001
53207815002
5600900000300010001
461728
53207804001
5600900000300030001
5600900000300040001
5600900000300050001
(1-97),(2-148)
5600900000300060001
5600900000300080001
(1-99),(2-76)
5600900000700010001
461718
53207810001
5600900000700020001
5600900000700030001
5600900000800010001
53207810002
5600900000800020001
5600900002800010001
461723
53207828001
5600900002800020001
5600900002800030001
5600900002800040001
5600900002800050001
5600900002800070001
5600900002900040001
461720
53207828002
5600900002900020001
5600900002900030001
5600900004600030001
53207846001
5600900004600040001
(1-33),(2-22)
5600900004600050001
5600900004600070001
5600900004600080001
5600900005000010001
53207846002
5600900004800010001
53207846003
5600900004900010001
53207846004
5600900004700010001
53207846005
5600900003000020001
461721
53207831001
5600900003000050001
5600900003000040001
1-86
5600900003000030001
5600900003200010001
461722
53207831003
5600900003200020001
5600900003200040001
5600900003200050001
5600900003200060001
5600900003200070001
5600900006300070001
461705
53207816001
5600900006300110001
5600900006300080001
5600900006300120001
5600900006300160001
5600900006300090001
5600900006300100001
(1-23),(2-148)
5600900006300010001
5600900006300150001
(1-107),(2-98)
5600900006300020001
5600900006300050001
5600900006300060001
5600900006300040001
5600900006300130001
5600900006300140001
5600900006300030001
(1-33),(2-12)
5600900005700020001
461702
53207852001
5600900005700030001
5600900005700040001
5600900005700050001
5600900005700060001
5600900005700080001
5600900005700090001
5600900005700100001
5600900005700010001
(1-39),(2-44)
5600900005700110001
5600900005700130001
4-38
5600900005800010001
53207852002
5600900005800020001
5600900007000010001
461708
53207852007
5600900007000020001
(3-19),(2-24)
5600900007000030001
(1-19),(4-40)
5600900007000050001
5600900007000040001
5600900005100060001
461714
53207849001
5600900005100050001
5600900005100070001
5600900005100080001
5600900005100090001
5600900005100110001
5600900005100120001
(1-37),(2-66)
5600900005100130001
5600900005100140001
5600900005100150001
5600900005100160001
5600900005100170001
5600900005100180001
5600900005100190001
5600900005100200001
5600900005100210001
(3-23),(2-22)
5600900005100220001
5600900005100250001
5600900005100260001
5600900005100270001
5600900005100280001
(1-55),(2-72)
5600900005200010001
53207849002
5600900001400010001
53207849003
5600900001400020001
5600900001400050001
5600900001400030001
5600900001400040001
5600900000100010001
53207807001
5600900000100020001
5600900000100030001
5600900000100040001
(1-33),(2-80)
5600900000100050001
5600900000100060001
5600900000100070001
5600900000100080001
(1-57),(2-152)
5600900000100090001
(3-41),(2-68)
5600900000100100001
(1-85),(6-94)
5600900000100110001
(3-7),(4-28)
5600900000100120001
5600900000100130001
5600900000100140001
5600900000100150001
(1-85),(2-58)
5600900000100160001
5600900000100170001
5600900000100180001
(3-27),(2-38)
5600900000100190001
5600900000100200001
5600900000100210001
5600900000100220001
5600900000100230001
5600900000100240001
5600900000100250001
5600900000100260001
(5-17),(2-14)
5600900000100270001
5600900000100280001
5600900000100290001
5600900000100300001
5600900000100310001
5600900000100320001
5600900000100330001
5600900000100340001
5600900000100350001
5600900000100360001
5600900000100370001
5600900000100380001
5600900000100390001
5600900000100400001
5600900000100410001
(1-19),(12-16)
5600900000100420001
1,4-6
5600900000100430001
5600900000100440001
5600900000100450001
(1-27),(2-12)
5600900000100460001
5600900000100470001
5600900000100480001
5600900000100490001
(1-19),(4-22)
5600900000100500001
5600900000100510001
(1-141),(2-32)
5600900000200010001
461700
53207807002
5600900000200030001
(1-14),(6-20)
5600900000200040001
5600900000200050001
(3-13),(2-6)
5600900000200060001
5600900000200070001
5600900000200080001
5600900000200090001
5600000100020240005
5600000100000200004
5/28,6
1600000100048970002
2,43,45,47/50,14,15
1600000100048970003
5600900000200020001
(19-37),(83-129),(24-62),(96-142)
2600000200000130001
2600000200000130002
2600000200001400001
357634
(1-43),(55-79),(4-70)
2600000200001610001
(45-49),(72-80)
2600000200001610002
2600000200002110001
2,6,8
5600000400051390002
6300000100005150001
6300000100005150002
,(1-129)
6300000100008300001
6300000100008300002
6300000100008550004
4000000100006870001
4000000100006870002
(124-160)
5600000300000930005
(93-125)
5600000300000930006
3100400100000970001
309991
3126
14420000000
(119-259),(122-248)
3100400100000970002
309992
3100400100001600001
309993
(65-203),(78-203)
3100400100001600002
309994
3100400100001660001
(71-201),(76-210)
3100400100001660002
(80-98),(75-91)
3100400100001250001
309995
(2-78),(1-73),(100-378)
3100400100001250002
309996
(60-68),71¡,73
3100400100001430001
3100400100001430002
(80-96),(127-139)
3100400100001510001
(2-78),(1-125)
3100400100001510002
(112-126),(163-177)
3100400100001820001
(2-110),(1-161)
3100400100001820002
(34-50),(61-75)
3100400100001860001
(2-32),(1-59)
3100400100001860002
(80-166),(171-189)
3100400100001980001
(2-78),(1-169)
3100400100001980002
(110-114),(141-155)
3100400100002060001
(2-108),(1-139)
3100400100002060002
(100-120),60
5400000100008600009
120/3,120/5,120/6
5400000100008600010
5400000100008600011
(70-110),(139-185)
7400000100008810004
200-999
5002600014400010001
46246816001
(4-30),(17-31)
5900001300000100003
618206
8
3300000100001210004
8
3300000100001210005
3300000100003950003
3300000100003950004
5600000400063120001
5600000400063120002
(26-76),(33-99),2-24
5600000400093090001
5600000400093090002
(57-93),(60-68)
5600000400032820005
(36-144)
6100500100001810001
347044
6192
6142
60206501000
(65-101)
6100500100001810002
3301100100001820001
602201
(4-998),(3-999)
3301100005600000001
17244824003
62-76
3300300012600080001
626014
3338
3312
17210846001
3300300012600050001
601422
47-51,116-128
3300300012600070001
28-52
3300300012600030001
53-84
3300300012600100001
0200000700002070001
(1-43),(2-58)
0200000700000490001
0200000700001430008
(23-25),(29-35),1-3,6,9,15,4
0200000700000230001
0201300100000150003
0201300100000150004
0201300100000190004
0201300100000190005
0201300100000190006
0201300100003400005
(167-999)
0201300100003400006
0201300100003400007
0201300100003400008
0201300100000680003
0201300100000680004
0201300100000690003
(60-998)
0201300100000690004
0201300100000820003
0201300100000820004
0201300100000950005
(92-130)
0201300100000950006
(95-999)
0201300100000950007
0201300100000950008
0201300100001140003
0201300100001140004
0201300100001360003
(115-999)
0201300100001380005
(112-138)
0201300100001380006
0201300100001380007
0201300100000360003
(61-91)
0200100100001840008
7400000100001140001
454016
7400000900000030004
7400000900000030005
7400000900000440003
2,(16-30)
7400000900000930003
7400000900001110003
(16-20),(26-30),(60-140)
7400000900001650003
(1-9),(25-39)
7400000900002140003
7400000900002700003
7400000900002880003
7400000900002880004
7400000900002970003
7400000900002970004
7400000900003390003
7400000900003450003
7400000900003480006
7400000900003480007
7400000900003630003
7400000900003860003
7400000900003900003
7400000900003900004
1801800100001510002
1800000100004420007
(2-6),9,79,81-85
1600000100001490001
10,2,4,5,3,6,7
1600000100007320001
(291-301)
5600000100002540012
(122-138),(111-125)
5600000100002390005
5600000100000850003
(45-61),(50-70)
5600000100000810004
(63-173),(72-178)
5600000100000810005
(30-120)
5600000100001640005
5600000400039990007
48-65
3800000400001160007
(9-35),32,51
3800000400002580001
2-6,14,14 ,12
3800000400002080001
3800000400001980001
3800000400002610001
2-36
3800000400001890001
3800000400002620001
3800000400001700001
3800000400002630001
3800000400002640001
2,3,6-13
3800000400002650001

3800000400001030001
3800000400002710001
3800000400001870002
(2-18),(1-23)
3800000400002630002
(2-66),(7-15)
3800000400002720001
3800000400002730001
1,3-36
3800000400001310001
3800000400002740001
3800
3800000400002640002
3800000400002750001
3-10,12,14,15,16,16 ,17,18,18 ,19
3800000400002760001
3800000400002770001
3800000400002780001
(4-34),3,5,(9-19),(23-29),(52-74)
3800000400002790001
3800000400002800001
3800000400002810001
3800000400001040001
17,17 ,18-20
3800000400001030002
2,4,12,14
3800000400001080001
13 ,13¡,14¡,16,18 ,18¡,18¢,22,24,26 ,26¡
3800000400001080002
3800000400002820001
3800000400001110001
3800000400002840001
1,2,3,1 ,1¡,2 ,5¡,6 ,7¡,8 ,12,13¡,16
3800000400002850001
3-34
3800000400002860001
3800000400002870001
3800000400001130001
3800000400001190001
3800000400002900001
665822
3800000400001240001
(2-20),(11-21)
3800000400001230001
3800000400002910001
2-43
3800000400001250001
(1-41),(28-42)
3800000400002920001
3800000400002940001
3800000400002950001
3800000400002100001
33,35,55
3800000400001280001
665829
3800000400001280002
21/21 
3800000400001280003
665833
3800000400002970001
3800000400002980001
7800000000008910006
96ª1,100ª1,100ª2,100ª3,100ª4
7200000100003080007
104ª1,104ª2,104ª3,104ª4,104ª5,104ª6
7200000100003080008
3601700000100210001
3601700000100210002
3601700000100260001
79-106
3601700000100260002
6400000100004100005
3200000100004600005
0201300100000680005
0201300100000150005
1,1¡,3,5,7,9,(11-17),(28-48)
5400000400000330001
1¢,3 ,5 ,5¡,7 ,7¡,9 ,(4-24)
5400000400000330002
(1-13),2,2 ,2¡,4
5400000400000390001
23 ,23¡,(25-39),(8-18)
5400000400000390002
6 ,6,58
3400000100020000003
(1-49),(2-168)
3401000100000640001
404507
3455
3409
18216501000
(121-179),(170-298)
3401000100000640002
404503
(1-363),(2-342)
3401000100001340001
(344-380),(365-417)
3401000100001340002
(1-267),(2-228)
3401000100001290001
(269-287),(230-260)
3401000100001290002
(1-265),(2-228)
3401000100001140001
(230-290),(267-307)
3401000100001140002
3401800100002740003
3401800100002630001
(2-16),(3-21)
3401800100002000001
3401800100004170001
1,2,10
3401800100003050001
(31-75)
4800000100003740003
398042
4800000100003740004
398035
4800000100003740005
398910
6,(14-30),(81-153)
4800000100003740006
5502100006600000001
644526
52244802005
(3-39),(4-76)
3300800100000280001
3300800100000280002
3300800100000490004
275
2200000100004860010
2200000100000810003
2200000100008100004
268
2200000100004530010
2200000100005840005
(257-287),(274-302)
2200000100002710010
(270-358)
2200000100004690018
(313-331),(248-264)
2200000100008150001
(728-780)
2200000100003360003
310,316,(332-726),(487-559),(611-851)
2200000100003360004
6300000700000510005
6300000700003650001
(92-134)
6300000700003650002
445092
(1-93),(2-90)
5900001000001660001
618905
5918
57427000000
(95-999),(92-998)
5900001000001660002
618909
(1-119),(2-64)
5900001000001680001
618904
(121-999),(66-998)
5900001000001680002
618903
5900001000001510001
618900
(65-999),(62-998)
5900001000001510002
(1-105),(2-98)
5900001000001860001
(107-999),(100-998)
5900001000001860002
5900001000000880001
(37-85),(48-86)
5900001000000880002
(87-999),(88-998)
5900001000000880003
(1-79),(2-94)
5900001000001870001
(81-999),(96-998)
5900001000001870002
(1-89),(2-70)
5900001000001770001
(91-999),(72-998)
5900001000001770002
5900001000001950001
(85-999),(82-998)
5900001000001950002
5900001000000710001
(61-65),(66-88)
5900001000000710002
5900001000000710003
5900001000001800001
5900001000001800002
(1-85),(2-98)
5900001000001750001
(87-999),(100-998)
5900001000001750002
5900001000000860001
(51-55),(38-94)
5900001000000860002
(79-999),(96-998)
5900001000000860003
5900001000000910001
(55-91),(56-88)
5900001000000910002
(93-999),(90-998)
5900001000000910003
5900001000001310001
5900001000001310002
5900001000001790001
5900001000001790002
5900001000001650001
5900001000001650002
5900001000001640001
618910
(17-103),(16-132)
5900001000001640002
618907
(105-999),(134-998)
5900001000001640003
5900001000001380001
(15-91),(20-92)
5900001000001380002
(93-999),(94-998)
5900001000001380003
5900001000001260001
(65-95),(62-102)
5900001000001260003
(97-999),(104-998)
5900001000001260004
5900001000001560001
5900001000001560002
5900001000001250001
(67-121),(40-100)
5900001000001250002
(123-999),(102-998)
5900001000001250003
5900001000001550001
5900001000001550002
5900001000001150001
(85-999),(88-998)
5900001000001150002
5900001000000830001
(65-85),(64-86)
5900001000000830002
5900001000000830003
(1-93),(2-74)
5900001000000820001
(95-103),(76-92)
5900001000000820002
(105-999),(94-998)
5900001000000820003
5900001000001430001
(61-999),(60-998)
5900001000001430002
5900001000001420001
(31-103),(30-118)
5900001000001420002
(105-999),(120-998)
5900001000001420003
5900001000000920001
(59-999),(56-998)
5900001000000920002
5900001000001600001
(31-143),(30-118)
5900001000001600002
(145-999),(120-998)
5900001000001600003
5900001000000060001
5900001000000060002
5900001000001400001
(15-77),(16-96)
5900001000001400002
(117-999),(130-998)
5900001000001400003
5900001000001630001
(19-103),(22-106)
5900001000001630002
(191-999),(108-998)
5900001000001630003
5900001000001500001
5900001000001500002
(1-89),(2-94)
5900001000001280001
5900001000001280002
5900001000000800001
(21-69),(28-86)
5900001000000800002
(71-999),(88-998)
5900001000000800003
5900001000000720001
5900001000000720002
(1-35),(2-58)
5900001000001080001
(37-999),(60-998)
5900001000001080002
5900001000001690001
(48-80),(25-73)
5900001000001690002
(75-999),(82-998),63
5900001000001690003
5900001000000350001
(17-999),(10-998)
5900001000000350002
(1-91),(2-90)
5900001000001190001
(93-999),(92-998)
5900001000001190002
5900001000001010001
(13-999),(6-998)
5900001000001010002
(1-71),(2-94)
5900001000001180001
(73-999),(96-998)
5900001000001180002
(53-91),(46-84)
5900001000001170001
(1-51),(2-44),(93-999),(86-998)
5900001000001170002
5900001000000950001
(65-999),(78-998)
5900001000000950002
5900001000001590001
(31-999),(48-998)
5900001000001590002
5900001000001100001
(43-61),(56-96)
5900001000001100002
(63-999),(98-998)
5900001000001100003
5900001000000320001
5900001000000320002
5900001000000840001
5900001000000840002
(1-73),(2-60)
5900001000001970001
(75-999),(62-998)
5900001000001970002
(2-36),(1-65),(69-999)
5900001000000330001
(38-998),67
5900001000000330002
(1-53),(2-60)
5900001000001520001
(55-999),(62-998)
5900001000001520002
(11-47),(16-58)
5900001000001390001
(49-87),(60-88)
5900001000001390002
5900001000001390003
5900001000001390004
5900001000002010001
5900001000002010002
(1-63),(14-60)
5900001000001260002
7000000300000430001
7000000300000430002
3000000100003510003
2,4,(8-38),(11-41),(49-93)
1600000100049890001
(40-154),(95-211)
1600000100049890002
(156-252),(213-305)
1600000100049890003
7400000100001140002
7400000100001140004
7400000100001140005
(109-127)
7400000100001140006
7400000100001140007
7400000100001140008
20,22,27
7400001100100190001
456799
75543000002
7400001100100140001
1,1,2,3,3,4,4,5,5,6,6,7,7,8,8,9
7101600018600000001
301121
7148
7130
70232862001
9,10,10,11,11,12,12,13,14,14,15,15
7101600018600000002
15,16,16,17,17,17,18,19,20,20,27-34
7101600018600000003
37,39,42,45-62,67-76,90,95-103,113-119
7101600018600000004
137-148,193-198
7101600018600000005
7101600016000000001
301123
70232824020
7101600024800000001
70232824029
1-4,6,7,9-53,55-74
7101600007900000001
301117
70232808003
7101600000900000001
70232808001
1-5,7-31,33-36,38-74
7101600009700000001
301124
70232876010
1-7,9-24,26-40,42-46,48-51,53-55,57-63
7101600013000000001
301116
70232876013
65-69,71-81,83-88,90,91,93-101,103-108
7101600013000000002
110,112,114,116,118,120-124,127,131-148
7101600013000000003
127,129
7101600013000000004
7101600023400000001
301125
70232876001
1-8,10,11,13,19,33,34,39,41-43,45-49
7101600025300000001
70232876021
53,55-67,70-72,76-83,85-88,91,95-98,100
7101600025300000002
102-104,106-110,114,115,118,120-123
7101600025300000003
131-142,144-147
7101600025300000004
7101600026700000001
301138
70232856004
7101600018200000001
300903
70232856006
7101600014600000001
70232856005
7101600003200000001
301105
70232816002
7101600012400000001
300045
70232816008
7101600004100000001
300911
70232816003
7101600022300000001
301103
70232872012
7101600022700000001
70232872001
7102400015200040003
301204
70248563000
27,28,31,34,35,41,44,61,62,64
7102400015200060001
45-49
7102400015200010001
56-60,63,66,93
7102400015200020001
36,38-40,100
7102400015200050002
70,71,73,74,77,79-82,86,88-90,98,101-103
7102400015200030001
301203
39,105
7102400015200030002
1-9,11-13,15-25,27,28,30-38,(39-51)
7102400015200090001
1-7,9-14,16-18,20-32,33,35
7102400015200140001
7102400015200130001
7102400015200180001
1-9,11,13-19,21
7102400015200100001
28 ,30
7102400015200080002
1-3,7-9,11-14
7102400015200040004
2,4-8,12,14-17,20,23,24,26,27,32-34,38
7102400015200080003
2,8,18,20
7102400015200110001
1-3,5,15,16,24,26,31,37
7102400015200190001
1-18,20,22,24
7102400015200070001
2,4,6,7,9,11,13,14,15
7102400015200200001
3,6,7,10,13,17-19,21,22,26,27
7102400015200220001
7800000000009540013
(42-998),(49-999)
5202800100001970003
(48-998),(81-999)
5202800100000720003
(42-68),(51-79)
5202800100001290003
5202800100000680001
5202800100000680002
1ª1,1ª5
3200000100000430006
4200000800001110001
4200000800001120001
3100000100003220001
(1-43),(2-20)
3100000100004470001
3100000100004710001
3100000100004720001
3100000100004730001
3100000100004740001
3100000100000210001
3100000100000220001
3100000100004770001
3100000100004780001
3100000100004790001
(1-59),(2-20)
3100000100000320001
3100000100000330001
3100000100000340001
3100000100000350001
3100000100000360001
3100000100000370001
(1-57),(2-106)
3100000100000380001
3100000100000390001
3100000100000620001
3100000100000630001
(1-9),(2-68)
3100000100000640001
3100000100000650001
3100000100000720001
3100000100000730001
(1-333),(2-352)
3100000100000710001
3100000100000840001
3100000100000850001
3100000100000860001
3100000100000870001
3100000100000960001
3100000100000970001
3100000100000980001
3100000100004860001
3100000100004870001
3100000100004880001
(1-165),(2-94)
3100000100001000001
(1-19),(2-36)
3100000100001010001
3100000100001020001
3100000100001030001
3100000100001040001
3100000100001050001
3100000100001160001
3100000100001090001
3100000100001170001
3100000100001100001
3100000100001180001
3100000100005720001
3100000100001220001
3100000100001210001
3100000100004920001
3100000100004930001
3100000100005420001
3100000100005430001
(1-91),(2-122)
3100000100001300001
3100000100001320001
3100000100001310001
3100000100001390001
3100000100001400001
3100000100001440001
3100000100001460001
3100000100001450001
3100000100001510001
3100000100001520001
3100000100001530001
(1-99),(2-284)
3100000100001500001
3100000100001620001
3100000100001630001
3100000100001640001
(1-91),(2-76)
3100000100001710001
3100000100001680001
3100000100001690001
3100000100001700001
3100000100005730001
3100000100001760001
3100000100001770001
3100000100001790001
3100000100001800001
3100000100001810001
3100000100001780001
3100000100004940001
3100000100004950001
3100000100004960001
3100000100001880001
3100000100001890001
3100000100005440001
3100000100005450001
3100000100005460001
3100000100005470001
3100000100005480001
3100000100005740001
(1-161),(2-184)
3100000100001940001
3100000100001950001
3100000100001960001
(1-25),(1-26)
3100000100001970001
3100000100001980001
3100000100002010001
3100000100002000001
3100000100001990001
3100000100004620001
3100000100004610001
3100000100002040001
3100000100004600001
3100000100004590001
3100000100002160001
3100000100002170001
3100000100002180001
3100000100002190001
3100000100002240001
3100000100002300001
3100000100002290001
3100000100002280001
3100000100002390001
3100000100002380001
3100000100002370001
3100000100005000001
3100000100005010001
3100000100005020001
3100000100002400001
3100000100002460001
3100000100002450001
3100000100002440001
3100000100002430001
3100000100002420001
3100000100005120001
3100000100005130001
3100000100005040001
3100000100005050001
3100000100005060001
3100000100005070001
3100000100005080001
(1-51),(2-58)
3100000100002650001
3100000100002660001
3100000100002770001
3100000100002760001
3100000100002750001
(1-97),(2-96)
3100000100002820001
3100000100002860001
3100000100002850001
3100000100002840001
3100000100002830001
3100000100002870001
3100000100002880001
3100000100002890001
3100000100002900001
3100000100002910001
3100000100002920001
3100000100002930001
3100000100002940001
3100000100002950001
3100000100005150001
3100000100005160001
(1-59),(2-94)
3100000100005170001
3100000100005180001
1-130
3100000100005200001
3100000100005210001
3100000100005240001
3100000100005250001
3100000100005260001
3100000100005270001
3100000100005760001
(1-37),(2-68)
3100000100003270001
3100000100003280001
3100000100003290001
3100000100003300001
3100000100003310001
3100000100003320001
3100000100003390001
3100000100003400001
3100000100003410001
3100000100003420001
3100000100003370001
3100000100003360001
(1-15),(2-6)
3100000100005370001
3100000100005360001
3100000100005350001
3100000100005340001
3100000100005330001
3100000100003560001
3100000100003570001
3100000100005510001
1-700
3100000100003620001
3100000100003630001
3100000100003640001
3100000100003650001
3100000100003660001
3100000100003670001
3100000100005770001
3100000100003700001
3100000100003710001
3100000100003720001
3100000100005780001
3100000100003690001
3100000100005790001
3100000100003790001
3100000100003800001
3100000100003810001
3100000100003850001
3100000100005800001
3100000100005810001
3100000100005820001
3100000100003950001
3100000100005830001
3100000100003960001
3100000100004570001
3100000100001820001
3100000100004840001
3100000100005100001
3100000100005110001
3100000100001610001
3100000100005570001
3100000100005580001
3100000100005590001
3100000100004060001
3100000100004070001
3100000100004080001
3100000100004090001
3100000100004640001
3100000100004650001
3100000100004660001
3100000100004670001
3100000100004680001
3100000100004690001
(1-63),(2-56)
3100000100004240001
3100000100004270001
3100000100004250001
3100000100004260001
3100000100004290001
3100000100004310001
3100000100004300001
(1-133),(2-98)
3100000100004420001
3100000100004430001
3100000100004440001
3100000100004450001
3100000100000020001
3100000100004560001
3100000100000040001
(1-39),(2-8)
3100000100000030001
3100000100001130001
3100000100001120001
3100000100000090001
3100000100000110001
3100000100000100001
3100000100000250001
3100000100000280001
3100000100000290001
(1-99),(2-32)
3100000100000300001
3100000100000460001
3100000100000470001
3100000100000050001
(1-43),(2-12)
3100000100000480001
3100000100000490001
3100000100000560001
(1-77),(2-96)
3100000100000590001
(1-123),(2-94)
3100000100000680001
3100000100000690001
(1-47),(2-32)
3100000100000410001
3100000100000420001
(1-23),(2-42)
3100000100000430001
(1-79),(2-44)
3100000100004760001
3100000100000440001
(1-77),(2-146)
3100000100000450001
(1-71),(2-50)
3100000100001720001
(1-49),(2-30)
3100000100004800001
(1-27),(2-80)
3100000100000500001
3100000100000510001
3100000100000530001
3100000100004520001
(1-35),(2-62)
3100000100000540001
3100000100000120001
3100000100000570001
(1-89),(2-424)
3100000100000580001
3100000100005630001
3100000100000600001
3100000100000610001
(1-89),(2-62)
3100000100000660001
3100000100000670001
3100000100004320001
3100000100004330001
3100000100004340001
3100000100004750001
(1-73),(2-32)
3100000100000240001
3100000100000230001
(1-187),(2-206)
3100000100000200001
(1-85),(2-122)
3100000100000190001
3100000100000170001
3100000100005530001
3100000100000160001
(1-77),(2-88)
3100000100000150001
3100000100000130001
3100000100000080001
3100000100000070001
(1-105),(2-92)
3100000100004510001
3100000100004700001
3100000100002350001
3100000100003590001
(1-267),(2-314)
3100000100002050001
3100000100002520001
3100000100004150001
3100000100000700001
3100000100004810001
3100000100000770001
3100000100000800001
3100000100005400001
3100000100000810001
3100000100000820001
3100000100000890001
3100000100000900001
3100000100000910001
(1-47),(2-78)
3100000100000930001
3100000100004490001
(1-55),(2-102)
3100000100004500001
3100000100004900001
3100000100000990001
(1-127),(2-154)
3100000100001080001
3100000100001070001
3100000100004910001
3100000100001190001
3100000100001200001
3100000100001230001
3100000100001240001
3100000100001250001
(1-33),(2-48)
3100000100001270001
(1-21),(2-60)
3100000100001260001
(1-91),(2-158)
3100000100001280001
3100000100001340001
(1-181),(2-82)
3100000100000940001
(1-203),(2-134)
3100000100000950001
(1-77),(2-72)
3100000100001350001
3100000100001370001
3100000100001420001
3100000100001430001
(1-31),(2-74)
3100000100001470001
(1-65),(2-68)
3100000100001490001
3100000100001560001
3100000100001570001
3100000100001540001
3100000100001550001
(1-39),(2-68)
3100000100001580001
3100000100001590001
(1-107),(2-100)
3100000100001650001
3100000100001660001
3100000100001670001
3100000100001730001
(1-31),(2-82)
3100000100001830001
3100000100001860001
3100000100004580001
3100000100004550001
3100000100001870001
(1-71),(2-100)
3100000100001900001
3100000100001910001
3100000100002020001
3100000100002060001
3100000100002070001
3100000100002080001
3100000100002090001
3100000100002100001
3100000100002110001
3100000100002130001
3100000100002200001
3100000100005620001
3100000100002260001
3100000100002270001
3100000100002310001
(1-57),(2-6)
3100000100004970001
3100000100002570001
3100000100002320001
(1-49),(2-88)
3100000100002330001
3100000100002410001
3100000100002470001
3100000100002480001
3100000100002490001
3100000100002500001
(1-71),(2-88)
3100000100002510001
3100000100002530001
3100000100002540001
3100000100002550001
(1-139),(2-152)
3100000100002560001
3100000100005090001
3100000100002580001
3100000100002590001
(1-57),(2-88)
3100000100002600001
3100000100002610001
3100000100002620001
3100000100002630001
(1-45),(2-84)
3100000100002640001
3100000100005140001
3100000100002670001
3100000100002680001
(1-83),(2-28)
3100000100002690001
3100000100002710001
3100000100002780001
(1-89),(2-122)
3100000100002790001
3100000100002800001
(1-27),(2-76)
3100000100002970001
3100000100005500001
3100000100005190001
3100000100002980001
3100000100002990001
3100000100003010001
3100000100003030001
3100000100005220001
3100000100003040001
(1-85),(2-184)
3100000100003050001
(1-69),(2-36)
3100000100003070001
3100000100003060001
3100000100001930001
3100000100003080001
3100000100003090001
(1-83),(2-20)
3100000100005280001
3100000100003100001
3100000100005610001
3100000100005230001
(1-103),(2-118)
3100000100005290001
3100000100003110001
3100000100003130001
3100000100003120001
(1-11),(2-54)
3100000100003150001
3100000100003160001
(1-47),(2-20)
3100000100003170001
3100000100005680001
3100000100005840001
3100000100005320001
3100000100003200001
3100000100003210001
(1-143),(2-108)
3100000100003230001
3100000100003240001
3100000100003250001
3100000100005850001
3100000100003260001
(1-53),(2-24)
3100000100005520001
3100000100003330001
(1-25),(2-42)
3100000100003340001
3100000100003140001
3100000100005860001
3100000100005870001
3100000100003380001
(1-151),(2-38)
3100000100003430001
(1-12)
3100000100003440001
3100000100003450001
3100000100003460001
3100000100003470001
3100000100004540001
3100000100003480001
3100000100003490001
(1-93),(2-108)
3100000100003500001
(1-57),(2-28)
3100000100003510001
3100000100003520001
3100000100003540001
(1-21),(2-34)
3100000100003550001
3100000100003610001
3100000100003730001
3100000100003740001
3100000100003760001
3100000100003750001
3100000100003770001
3100000100003780001
3100000100003820001
3100000100003830001
3100000100003840001
3100000100003860001
3100000100003870001
3100000100003880001
3100000100003890001
3100000100003900001
3100000100003910001
3100000100003920001
3100000100005490001
3100000100003940001
3100000100004380001
3100000100003990001
(1-45),(2-70)
3100000100004000001
3100000100004010001
3100000100004030001
3100000100004050001
3100000100004100001
(1-125),(2-112)
3100000100004110001
(1-175),(2-180)
3100000100004120001
3100000100004140001
3100000100004160001
3100000100004170001
3100000100005380001
(1-11),(2-34)
3100000100004180001
3100000100004190001
3100000100004200001
3100000100004210001
3100000100004220001
3100000100004230001
3100000100004280001
3100000100005880001
(1-38),(14-32)
3100000100004350001
3100000100004390001
3100000100005390001
(1-117),(2-82)
3100000100004400001
3100000100004410001
3100000100004460001
3100000100004480001
3100000100002250001
(51-59),(44-68)
3100000100001480002
(77-159),(70-128)
3100000100001480003
(17-89),(20-110)
3100000100001290001
(109-203),(112-200)
3100000100001290004
39,(41-71),(60-102)
3100000100002810002
(69-183),(102-194)
3100000100005700002
3100000100004350002
(39-40)
3100000100004350003
(41-61),(34-38)
3100000100004350004
(39-85),(12-42)
3100000100002720002
(2-15)
3100000100002210002
129
3100000100001920002
(17-18)
3100000100003000002
(31-73),(116-124)
3100000100003180002
(2-30),(1-3)
3100000100003180003
3100000100005890001
(85-137),(84-124)
4300000100000500004
(47-79),(52-84)
4300000100000670004
(1-83),(2-72)
7800000002300280001
197758
40281554000
7800000002201800001
5600000200200010001
462292
5606
53415808001
1-66,(67-99)
5600000200200020001
5600000200200030001
5600000200200140001
5600000200200040001
5600000200200050001
5600000200200110001
5600000200200060001
5600000200200080001
1,3,5,7-17
5600000200200070001
1-28,(30-50)
5600000200200090001
5600000200200100001
462214
1,2,5,(6-12)
5600000200500010001
462274
53415808005
1-5,7-13
5600000200500020001
1-4,7-10
5600000200500030001
5600000200500040001
1,2,4-9,(12-16)
5600000200500050001
1-3,5-22,27-30,32-43,45,46
5600000200500060001
1-7,(9-21)
5600000200300010001
462215
53415000000
1,3-10,12,14,20,22
5600000200300030001
1-7,9,10,12-16,19-23,25,26
5600000200300020001
1-28,(30-42),41,43
5600000200300040001
1-3,5,6,8-12,(14-22)
5600000200400010001
462290
53415808006
5600000200400020001
1-6,8-18,(20-36)
5600000200400030001
2,6,8-10,13,15,16,18,19,21,23
5600000200400040001
5600000200400050001
1-8,10,12,13,15-18,20,22,24-28,30-32,34
5600000200400060001
36-41,43
5600000200400060002
1-17,(19-25)
5600000200400070001
5600000200400090001
6103500100000500001
347636
6186
6153
60250501000
(51-199),(26-200)
6103500100000500002
347632
(1-27),(2-72)
6103500100001170001
347630
(33-199),(80-200)
6103500100001170002
347631
6103500100001360001
(37-199)
6103500100001360002
(1-97),(2-106)
6103500100001380001
(99-199),(108-200)
6103500100001380002
347634
6103500100001440001
(89-199),(90-200)
6103500100001440002
347640
6103500100001460001
(78-157),(88-204)
6103500100001460002
(161-999),(206-998)
6103500100001460003
(1-39),(2-46),88,89,90
6103500100001550001
(45-79),(98-200)
6103500100001550002
6103500100001640001
(23-199)
6103500100001640002
(1-103),(2-64)
6103500100001990001
(105-999),(66-998)
6103500100001990002
(3-25),(2-40)
6103500100001880001
(27-199),(42-200)
6103500100001880002
(1-117)
6103500100003810001
119,(2-200)
6103500100003810002
(1-199)
6103500100002150001
(2-200)
6103500100002150002
6103500100002360001
6103500100002360002
(1-227),(2-298)
6103500100003890001
(229-999),(300-998)
6103500100003890002
(1-69),(2-54)
6103500100002750001
(71-199),(56-200)
6103500100002750002
6103500100002760001
(69-199),(74-200)
6103500100002760002
(1-74),(2-74)
6103500100002770001
(79-199),(76-200)
6103500100002770002
6103500100003240001
(41-199),(72-200)
6103500100003240002
6103500100003300001
(59-199),(46-200)
6103500100003300002
6103500100000680001
(59-199),(56-200)
6103500100000680002
3400000100020000004
2,(6-10),(16-26)
3400000100026200001
(33-69),71,77
3400000100026410004
3400000100010550002
3400000100010550003
(61-63),67ª,78¡,(80-92)
3400000100026200014
6900000200000830002
4800000100002680001
(9-27),(30-52),7/1
4800000100002680002
(29-33),(56-86),54,94
4800000100002680003
4800000100002680004
86/2,88,90/2,96,98,110
4800000100002680005
5900000100013750001
(4-100),(1-99)
5900000100013750002
6100000100000700001
(61-999),(50-998)
6100000100000700002
(35-97),(36-102)
6100000100001980002
(31-47),(22-44)
6100000100002300002
(6-97),(2-112)
6100000100006720001
6100000100020650001
(102-128),103
2700000100004070025
680045
2700000100004240002
(10-26),2,4,6
2700000100008300002
2700000100008660001
1-21,23-999
2700000100008660002
20,21,24,35,37
2700000100002890002
2700000100000140001
2700000100000140002
(1-99),(2-66)
3603000007100290001
(101-193),(68-160)
3603000007100290002
(13-63),(20-42)
1600000100015830004
175,177,179,181
5200000100001410003
603068
5200000100010190003
0201500008100010001
453447
80215825002
0201500008100010002
0201500008300010001
80215825005
0201500006300010001
453446
80215804003
0201500005100010001
453437
80215810002
0201500005300010001
80215810005
0201500009200010001
80215825009
(1-63),(2-34)
0201500009200020001
0201500007100010001
453455
80215834002
0201500010800020001
453457
80215819009
0201500004000010001
80215804006
(21-27),(10-12)
0201500100001020002
0201500100001070003
0201500100001370001
0201500005200010001
80215810003
0201500001000020001
453443
80215843003
0201500005100020001
0201500005500030001
453438
80215849001
0201500005500010001
0201500005500040001
0201500005500020001
(1-21),(2-78)
0201500007700020001
80215834006
0201500000700010001
453442
80215861002
0201500100001170003
3000800000100310001
416410
3021
3007
12235551000
3000800000100310002
416411
(1-183),185,(2-244)
3000800000100080001
(187-213),185,(246-360)
3000800000100080002
6000000100003060004
(53-109)
6000000100002470004
6000000100001210004
4303100004100080001
613111
33235553000
4303100004100080002
613110
1,2,(3-25),27-999
4303100004100160001
4303100004100160002
1-28,(30-66),68-999
4303100004100170001
(29-67)
4303100004100170002
1,2,3,4
4303100004100190001
4303100004100190002
(1-13),15-999
4303100004100210001
4303100004100210002
4303100004100240001
4303100004100240002
4302200100000060001
1-9,10,12-45,50-57,59-62,(64-74)
4302200100000060002
4300800002500040001
4300800002500040002
142-999
7600000100000450003
(103-133),(137-141),(96-118),78
7600000100000450004
7600000100007820003
1-96,98-150,97,97/13
7600000100011370001
151-999,148,140,142,144
7600000100011370002
5000000400000520001
4500000200000040003
28,(31-35)
4500000200000320003
(26-56),(21-71)
4500000200000540003
4500000200000680004
(18-24),(29-51)
4500000200000890003
4500000200000900001
4500000200000900002
4500000200001360001
(20-150),(25-137)
4500000200001360002
(152-182),(139-185)
4500000200001360003
(62-68),(43-63),89
4500000200001560004
(70-164),(71-177)
4500000200001560005
(52-76),(41-43)
4500000200001900003
78,80,(57-77)
4500000200001900004
39,(45-55)
4500000200001900005
(22-28),(15-19)
4500000200002030003
(1-12)
4500000200002140001
4500000200002230004
(86-96),(47-57),(77-81)
4500000200002230005
4500000200002230006
4500000200002330004
(154-166)
4500000200002330005
(48-50),54,(57-105)
4500000200002730003
(56-68),(107-147)
4500000200002730004
(58-108),(37-81)
4500000200002960003
4500000200000010003
6200000100006690001
390017
6200000100001200001
(23-25),(55-77),81,85,(89-93),119
5202000100000350001
606500
22228501000
(97-115),(123-125),129,(131-139)
5202000100000350002
24,26,(32-44),(50-88),90,(92-98)
5202000100000350003
(104-112),116,118,(120-128)
5202000100000350004
5202000100000350005
(7-9),1,(13-19),(8-18)
5202000100000350006
606502
(2-10),16,(5-11),(13-17)
5202000100000220001
20,26,34,40,52,(56-62),(70-76),80,102
5202000100000220002
606505
(84-98),104,(110-114),120,122,126,134
5202000100000220003
(37-47),(51-55),(61-67),71,73,139
5202000100000220004
(75-113),(117-125),(129-131)
5202000100000220005
(2-6),(16-18),20,26,30,36,(38-44),5,9
5202000100000280001
(11-21),25,27,(33-43)
5202000100000280002
46,48,56,45,47,61,65
5202000100000280003
606504
(34-38),(35-37)
5202000100000370001
5202000100000370002
1,2,3,5,8,11,12,13,14,19
5202000100000430001
16,42,43
5202000100000430002
(28-32),(38-56),60,(64-74),(80-88)
5202000100001390001
606503
90,92,(33-47),53,(61-67),(71-79)
5202000100001390002
5202000100001390003
(2-6),(12-18),(1-7),(11-15),19,23,27
5202000100001390004
1-78,80
5202000100000710001
79,81-99
5202000100000710002
3300000100002140007
(5-11),(12-22)
7800000000006840001
7800000000006840002
2302100100000030007
62/1
2302100100000270009
62/2
2302100100000270010
(261-519)
2302100100000470015
1,1,1/3
2302100100000470016
2302100100000470017
2302100100000140009
(34-92)
2302100100000140010
2302100100000460004
2302100100000920005
2302100100000920006
2302100100000500003
2302100100000500004
2302100100001670001
(1-103)
2302100100001670002
(12-98)
2302100100001670003
58-62,(35-43)
2301800100000160001
353380
2337
03225000000
2301800100000280001
353383
(23-63),(30-54)
2301800100000280002
2301800100002830001
353389
03415000000
(1-173),(2-190)
2301800100001040001
353388
(175-213),(192-232)
2301800100001040002
2301800100001050001
(1-23),(4-26)
2301800100001570001
(33-83),(28-94)
2301800100001570002
353385
(2-52),(1-27),(39-69)
2301800100001620001
353386
(73-77),(56-62)
2301800100001620002
(2-12),1
2301800100001700001
2301800100002050001
32,54,68,78,40,102
2301800100001200001
(78-204),(206-316)
2301800100000070001
(77-129),(139-145)
2301800100000070002
(151-155),(171-265)
2301800100000070003
2301800100000230001
(1-29),(47-127)
2301800100000230002
2301800100000320001
40,(49-59)
2301800100000410001
(2-78),(1-75)
2301800100000640001
(132-144),(155-171)
2301800100000850001
2301800100001060001
(115-321),(94-284)
2301800100001060002
(1-145),(2-212)
2301800100001150001
(147-283),(214-322)
2301800100001150002
(98-130),(65-151)
2301800100001190001
(29-89),(101-107)
2301800100001200002
(2-32),(1-39)
2301800100003040001
353387
(84-178)
2301800100001260001
(40-62),(47-51)
2301800100001290001
(32-104),(29-95)
2301800100001510001
(44-90),(31-147),(149-201)
2301800100001840001
(130-248),,,,258,(137-251)
2301800100001980001
(34-80),(35-55)
2301800100002080001
2301800001200550001
353370
03225804001
2301800001200570001
(2-44),(1-51)
2301800001200590001
(2-36),(60-112)
2301800001200140001
(1-37),(53-121)
2301800001200140002
(2-86),(1-87)
2301800001200190001
(2-112),(1-99)
2301800001200290001
(2-104),(1-97)
2301800001200420001
(2-82),(1-79)
2301800001200480001
2301800001200510001
2301800001200050001
(120-182),(111-221)
2301800001200060001
(80-156),(97-145)
2301800001200090001
(2-82),(1-85)
2301800001200230001
(120-220),(103-185)
2301800001200730001
2301800001200750001
(2-42),(1-45)
2301800001200330001
(2-58),(1-49)
2301800001200110001
2301800001200390001
(10-50),(13-35)
2301800005900170001
353365
03225812001
2301800005900200001
(161-189)
2301800005900240001
353366
2301800005900500001
7100000100004200003
300600
(9-13),6,10
7100000100005980001
(3-43),(4-36)
7100000100002190001
(133-162),(163-227)
7100000100002190002
(38-94),(57-131)
7100000100002190003
(96-128),(133-161)
7100000100002190004
7100000100002190005
7100000100001510001
7100000100001510002
(26-32),36,38,42,46
7100000100001510003
1-17,(31-69),(38-44)
7100000100001560001
22-26
7100000100001560002
1-126,128,130
7100000100001840001
132,(188-196),189,191
7100000100001840002
1-48,69-71
7100000100001940001
49-64
7100000100001940002
65,66,79
7100000100001940003
2301800100000070004
281
2301800100000070005
(1-33),(2-56)
2301800100000160002
2301800100000230003
2301800100000410002
2301800100002830002
(77-81),(80-126)
2301800100000640002
(2-130),(7-153)
2301800100000850002
40,23-25
2301800100001050002
(323-337),(286-302)
2301800100001060003
76,78
2301800100001190002
(1-49),(4-40)
2301800100001190003
2301800100001200003
2301800100001260002
2301800100001290002
2301800100001510002
(3-13),(14-34)
2301800100001700002
2301800100001840002
(96-108),(134-190),(194-236)
2301800100001840003
(2-128),(11-135)
2301800100001980002
(51-57),61
2301800100002050002
2301800100002080002
1,3,(36-46)
2301800001200550002
353371
(46-94),(53-105)
2301800001200590002
(32-78),(31-79)
2301800001200570002
(2-116),(1-107)
2301800001200060002
(66-116),(67-111)
2301800001200050002
2301800001200090002
(70-96),(51-87)
2301800001200110002
(118-164),(129-175)
2301800001200140003
(92-96),(89-95)
2301800001200190002
(86-134),(91-137)
2301800001200230002
(116-154),(105-129)
2301800001200290002
(2-116),(1-99)
2301800001200730002
(38-82),(39-61)
2301800001200750002
(106-138),(99-131)
2301800001200420002
(88-138),(89-137)
2301800001200480002
(44-74),(55-91)
2301800001200330002
(76-124),(73-127)
2301800001200390002
(106-134),(103-153)
2301800001200510002
2301800005900170002
(12-146),(31-169)
2301800005900200002
(2-46),(1-59)
2301800005900240002
(163-189)
2301800005900500002
(1-83),(2-84)
0201500009800010001
453448
80215825015
0201500008800010001
80215825008
0201500010000010001
80215825018
0201500009000010001
80215825010
0201500005400030001
80215810007
0201500011700010001
80215853003
0201500010100150001
80215819001
0201500006500090001
80215834001
0201500000200010001
80215828007
1,2,4,5,6,7,8-13,19,21,23,25,27
5000001600000010001
143964
5041
46464000000
3,(14-28),29-35
5000001600000010002
143966
5000001600000040001
143960
5000001600000040002
1-18,20-30
5000001600000080001
5000001600000080002
1-21,23,25,27,29,31,33,35
5000001600000160001
22,24,26,28,30,32,34,36
5000001600000160002
5000001600000180001
16,18,20-43
5000001600000180002
5000001600000190001
1,3,5,7-90
5000001600000190002
2,4,5,6,8,12,14
5000001600000220001
1,3,7,9,10,11,13,15,16-30
5000001600000220002
5000001600000240001
143965
1,2,4,7,9-12,13-58
5000001600000240002
143969
14-30
5000001600000250001
5000001600000250002
10,12,14,16,18,20
5000001600000270001
1-9,11,13,15,17,19
5000001600000270002
5000001600000270003
143968
1-19,(21-51)
5000001600000380001
(20-64)
5000001600000380002
1,2,8,10
5000001600000390001
3-7,9,11-30
5000001600000390002
5700100100000150001
302043
5752
54401366000
9,12,14,17,19
5700100100000150002
302005
5700100100000150003
302010
7400001100000600002
7 
7400001100000460002
7400001100000180004
7400001100000180005
15 
7400001100000400003
7400001100000310004
7400001100000240003
29 ,29¢
7400001100000180006
43 
7400001100000310005
54,56,108
7400000100017350001
38,90,103
7400000100017340001
454114
7400000100017590001
(44-102)
1600000100002030003
1300000100000190001
61 ,61
1300000100000190002
430016
(82-94),(81-89)
1300000100000190003
430030
1300000100000190004
430011
1-8,10-12,14-24,26-32,34-36,38
1300000100000220001
(105-113),115 ,85
1300000100000220002
430003
(94-98)
1300000100000220003
(112-120),(115-117)
1300000100000220004
430001
(1-7),9-17,19,(22-78),(31-41)
1300000100000250001
1300000100000250002
(82-106)
1300000100000250003
(2-10),1,3,5,5 
1300000100000270001
1300000100000270002
(12-30),7,7 ,7¡,7£
1300000100000270003
(32-38),(9-17),28
1300000100000270004
1,3,4,6,8-19,(21-29),(30-38),39-54
1300000100000360001
(80-86),87-95,97,99,85 
1300000100000360002
(2-100),(1-83)
1300000100000010001
114,120
1300000100000010002
(1-11),12-19,(21-43)
1300000100000580001
(20-30),(47-59)
1300000100000580002
1,3,5-10,13,19-29,31-47,49-51,53-67
1300000100000550001
1300000100000550002
(2-6),(7-11),17-22,12,14,37-49
1300000100000830001
(110-118),119-140,142,144
1300000100000830002
1300000100000920001
14-59,(7-13),(61-77)
1300000100000920002
(1-17),(21-37)
1300000100001800001
430032
(2-18),19,(20-34)
1300000100001800002
1300000100001590001
1300000100001590002
1-9,(11-33)
1300000100001660001
(36-44),20,26,28,51,629
1300000100001660002
(48-60),(97-117)
1300000100001660003
(62-74),(153-163),143,171,173
1300000100001660004
(76-174),175-185,186,(187-225)
1300000100001660005
(55-65),64,64 ,64¢,66-75,96
1300000100001670003
1-6,(7-13),14-18,(20-30),31-35
1300000100001710001
(104-112),79,81,81 ,83,101
1300000100001710002
(85-99),(103-119),(120-132),125
1300000100001710003
1-8,10-22,24
1300000100001050001
(96-106),23,25-94
1300000100001050002
1-16,(18-22)
1300000100000030001
(17-23),24-36,(38-58),15 
1300000100000030002
3,4,9,11,(12-16),17-33,38-40,(42-54)
1300000100001770001
(70-76),77-127,(129-189)
1300000100001770002
1-17,(19-39)
1300000100001820001
(18-44),45-67,(69-103)
1300000100001820002
1300000100001820003
(74-108),(123-151),121 ,115
1300000100001820004
1,4-69,71
1300000100001870001
(70-74),75-83,(85-103),68 
1300000100001870002
13-18,20,(21-29),42,49,55,(67-73)
1300000100002010001
(142-170),171-227,(229-233)
1300000100002010002
26,35
1300000100002010003
430002
(12-18),17,17 
1300000100001790001
37,37¡
1300000100001790002
1-7,9,(8-20)
1300000100002200001
(22-74),65,15,155
1300000100002200002
(12-58),1,1 ,2,4,(25-47)
1300000100002230001
1300000100002230002
(120-132),133,(134-148),(49-61)
1300000100002230003
23 ,60
1300000100002230004
(26-34),24¡,87,89,91,95,97,147 
1300000100002280004
10,12,(13-19)
1300000100002340001
1300000100002340002
(2-18),(1-7),15
1300000100002370001
(20-50),(17-79)
1300000100002370002
2-23,(25-29),28
1300000100002510001
1300000100002510002
121,123,127,133
1300000100001710004
430006
1300000100000270005
22,(27-53),(68-94),62¡
1300000100001360003
1300000100000140001
5,7/1,7/2,36
1300000100002040002
1300000100002040003
1300000100002570001
1300000100000650001
1300000100001250001
13,16,17,19,19,20,21,29,37,39
1300000100000810004
(18-26),32
1300000100000810005
37,41,43,47
1300000100002810001
1,2,7,9,10
1300000100002820001
34,11,16,8
1300000100002820002
(7-27),(32-44)
1300000100001370003
15,19
1300000100002830001
1,4,(16-26)
1300000100000320001
1300000100001190001
2,4,6,10
1300000100001180001
3,9,9/1,10,10,18
1300000100001180002
5/1,5,11
1300000100001180003
(1-29),4,6
1300000100001630001
31
1300000100000040005
2,4,39,5
1300000100002440001
25,26,28,25
1300000100001530001
(4-22),26,28,32
1300000100002590001
6600002900000660001
623852
6611
65432000000
(2-22),(1-7)
6600002900001260001
(24-90),(9-77)
6600002900001260002
623854
6600002900000080001
623851
6600002900001130001
6600002900001130002
(16-22),(13-71)
6600002900001130003
6600002900000110001
(14-34),(13-49)
6600002900000110002
6600002900001110001
(68-78),(43-47)
6600002900000950001
623856
6600002900000690001
(8-998),(9-999)
6600002900000690002
(48-92),(45-73)
6600002900000220001
6600002900000550001
(10-98),(9-99)
6600002900000550002
(2-998),(13-999)
6600002900000430001
28,28 ,28¡,28¢,33
6600002900001080001
(2-26),(1-31),(30-998),(35-999)
6600002900001080002
623850
(2-64),(1-999)
6600002900000990001
6600002900000990002
(24-998),(73-999)
6600002900001130004
6600002900000080003
(2-66),(80-998),(1-41),(49-999)
6600002900000950002
6600002900000220002
(94-998),(75-999)
6600002900000220003
(6-998),(5-999)
6600002900001110002
2700000100007150001
2700000100007150002
(66-88),(75-111)
2500000100003660007
6100001200006970001
8-14
6100001200006970002
346521
99¤,99¦
6100001200009150003
34¡,34¢
5200000100012720004
5900000100008380001
5900000100006030008
5900000100002600004
5900000100003250001
5900000100003250002
330/1,330/2,330/3
5900000100005460016
(10-998),(3-999)
5900000100012770001
5901100000100020001
617700
5939
57228826001
5901100000100030001
(20-102),(19-101)
5901100000100030002
5901100000100080001
5901100000100080002
617702
14,19,21
5901100000100130001
(1-17),(23-99),(1-12),(16-100)
5901100000100130002
5901100000100590001
(19-151),(26-150)
5901100000100590002
5900000200002280001
618404
5911
57408000000
(30-50),(31-51)
5900000200002280002
618419
(32-132),(75-209)
5900000200002300001
618416
5900000200002300002
618415
(3-15),(8-38)
5900000200001660001
(17-59),(40-54)
5900000200001660002
618425
(104-146),(111-129)
5900000200001250001
(8-72),(5-109)
5900000200001250002
(34-106),(21-47)
5900000200001210001
618400
5900000200001210002
(14-26),(15-27)
5900000200000580001
5900000200000580002
618417
5900000200003160001
(55-125),(72-136)
5900000200003160002
5900000200003160003
5900000200001010001
(12-30),(1-17)
5900000200001010002
35,35 ,(37-61),(44-54)
5900000200003360001
2,2 ,(4-40),(1-33)
5900000200003360002
6,(5-15)
5900000200002440001
(64-68),(59-61)
5900000200002440002
(100-170),(107-147)
5900000200000330001
618426
5900000200000330002
5900000200000500001
5900000200000500002
(16-50),(17-89)
5900000200002630001
(70-144),(95-113)
5900000200002630002
0203500100000890001
453851
0263
80425000000
0203500100000890002
(38-146)
0203500100000890003
453850
(35-121)
0203500100000890004
(131-135)
0203500100000890005
453852
(148-224)
0203500100000890006
30,15
7400000900004030003
7400000900003720003
7400000900003140001
7400000100001070001
6901500100000430001
171251
12-25,(27-33)
6901500100000430002
(1-23),14,18,30,32,38
6901500100000530001
171255
6901500100000530002
171252
6901500100000670002
171253
(38-40),44,(48-52)
6901500100000670001
6901500100001070001
15-22,24,26-31,33,(34-40),(54-82)
6901500100001070002
1-23,28,28 ,28¡,32,34,35
6901500100001270002
(27-33),37,39
6901500100001270001
4303200012300160001
613367
4330
33236864001
(9-99),(14-98)
4303200012300170001
4303200012300180001
4303200100000850001
613340
33236501000
4303200100000860001
4303200100000870001
8/7,8/8,8/9,8/10,8/11,10/3,11,13
5100001100000090001
184606
5110
47530000000
(10-16),(18-28)
5100001100000090002
184664
(145-179)
5400000100013620007
(239-999)
5400000100012880007
(207-237)
5400000100012880008
5000002700003260003
(2-62),(5-43)
5700100100000140001
302004
(70-116),53,61
5700100100000140002
302012
(20-52),(7-35)
6800000400002020001
392009
52,(54-62),(37-69)
6800000400002020002
392001
(40-46),51,57
6800000400000140001
392002
6800000400000140002
(4-8),12,(1-35),39,43
6800000400004370003
(50-148),162,164,(45-133)
6800000400004370004
166,(170-178),(182-198),(210-256),348
6800000400004370005
392005
10,1,2
6800000400000310001
392028
12,28,(22-24),(31-35),(41-63)
6800000400000310002
392029
(114-136),(107-117)
6800000400004420001
(18-112),(21-105)
6800000400004420002
(138-178),121,119
6800000400004420003
392020
(4-16),(1-19)
6800000400004420004
2,(3-7)
6800000400000570001
(4-8),12,26,28,19,(21-39),57
6800000400000570002
392008
1-54,56,58
6800000400000580001
392032
55,57,59-98
6800000400000580002
392024
(77-193)
6800000400000590001
392026
(4-142),7,73
6800000400000590002
392022
6800000400000590003
(1-7),11,15
6800000400002130001
10,12,17,17
6800000400002130002
392018
(18-78),(19-117)
6800000400002130003
392016
(80-106),(121-199)
6800000400002130004
(110-130),(201-241)
6800000400002130005
6800000400000200001
6800000400000200002
(2-30),(11-45),1
6800000400000630001
(46-62),(32-38),(47-109)
6800000400000630002
(66-76),(111-117)
6800000400000630003
(2-114),(1-97)
6800000400000610001
(118-268),(101-161)
6800000400000610002
(2-64),(7-51),3
6800000400004750001
(66-154),(53-83),93,(99-131)
6800000400004750002
8,5,7,9
6800000400000620001
54-90
6800000400000620002
6800000400000780001
32-49
6800000400000780002
(4-14),(3-83)
6800000400000870001
2,(16-30),50,(72-168),(87-109)
6800000400000870002
6800000400000910001
59-98
6800000400000910002
2,2,2,2
6800000400000920001
(4-80),(1-51)
6800000400000920002
5,5/15,5
6800000400001060001
12,(22-26),14,7,25
6800000400001060002
(2-60),(76-102),(1-33),(51-61)
6800000400004510001
(104-128),142,(107-143)
6800000400004510002
134,147,(146-182),(161-175)
6800000400004510003
178,(186-256),(177-255)
6800000400004510004
(258-330),(261-373)
6800000400004510005
(332-404),(375-457)
6800000400004510006
(406-444),459,(463-501)
6800000400004510007
(2-28),(64-68),(1-19),(75-79)
6800000400001260001
70,(74-106),(81-107)
6800000400001260002
(12-44),1
6800000400001290001
(46-82),(7-15)
6800000400001290002
(16-160),(27-187)
6800000400004600003
(4-26),(3-39)
6800000400001500001
(30-50),(41-61)
6800000400001500002
(24-134),(3-125)
6800000400004720001
(129-177),136,136
6800000400004720002
6800000400001700001
54-98
6800000400001700002
1-40,(81-89)
6800000400001770001
6800000400001770002
(78-122),(101-131),91,95
6800000400001770003
6800000400001830001
6800000400001830002
392027
(22-74)
6800000400001830003
(2-24),(3-63)
6800000400001960001
(65-77)
6800000400001960002
6800000400001970001
1,7,(11-19),55,(45-49)
6800000400001970002
392003
6800000400002040001
(24-30),42,44,(15-57)
6800000400002040002
46,(50-110),(59-137)
6800000400002040003
(112-130),(139-165)
6800000400002040004
136,(169-193)
6800000400002040005
(195-313)
6800000400002040006
(4-12),(3-15)
6800000400002100001
2,2,16,22,28,(38-40),21,23,29
6800000400002100002
392030
(24-32),(70-80)
6800000400002140001
6800000400002140002
(2-20),(1-37)
6800000400002200001
(22-38),(90-110),(81-115)
6800000400002200002
121,123
6800000400002200003
(133-143)
6800000400002200004
6800000400002310001
59-97
6800000400002310002
6800000400006690001
6800000400006690002
(4-8),3
6800000400002320001
14,16,24,(7-33)
6800000400002320002
95,95
6800000400005500001
(2-36),(1-69)
6800000400005500002
(2-68),(1-171)
6800000400002470001
(70-108),(175-213)
6800000400002470002
392014
6,14,16,20,26,34,1,5,7,19,29
6800000400002580001
(62-68),(78-140),(57-67),(93-151)
6800000400002580002
(2-30),(1-3),5
6800000400002620001
(32-62),(5-33)
6800000400002620002
(2-12),48,50,(1-9)
6800000400002640001
6800000400002640002
(2-38),80,82,(1-25),(51-59)
6800000400002690001
(84-124),(61-81),(87-97)
6800000400002690002
(2-46),(1-23)
6800000400002740001
(50-72),(84-186),(29-45),(51-81)
6800000400002740002
6800000400002790001
(60-92),(55-89)
6800000400002790002
(2-22),(74-104)
6800000400004840001
(3-63),(65-155)
6800000400004840002
(108-192),(157-189),235
6800000400004840003
196,(241-273)
6800000400004840004
(198-230),(315-333)
6800000400004840005
196,(234-242),(275-283),246,248,252
6800000400004840006
(293-309),363,(369-373)
6800000400004840007
(2-18),(1-39),45
6800000400002860001
(66-104),41,49
6800000400002860002
(4-8),16,32,34,34,19,39,41
6800000400002900001
(60-138),(65-129)
6800000400002900002
(4-106),(3-59)
6800000400002940001
(108-146)
6800000400002940002
(2-44),(3-41)
6800000400003120001
2,4,4,6,62,64,1,3,5,7,59,63
6800000400003120002
(84-92),(73-77)
6800000400003120003
(96-108),79,79
6800000400003120004
(4-8),(1-11)
6800000400003140001
(12-28),27
6800000400003140002
(2-108),(1-133)
6800000400003360001
(112-152),(135-139)
6800000400003360002
(8-70),(9-51)
6800000400004810001
(74-108),(114-134),(57-113)
6800000400004810002
6800000400004810003
148,(156-160),176/12,176/13
6800000400004810004
164,174,176/11,176/14,178,180,184,119
6800000400004810005
123,125,139,143,(161-167),(179-187)
6800000400004810006
198,198,198,202,202,193,195
6800000400004810007
6800000400003470001
6800000400003470002
(56-100),(55-85)
6800000400003470003
6800000400003550001
6800000400003550002
6800000400003740001
(90-122),(75-93)
6800000400003740002
4,(20-24),28,1,5
6800000400003760001
8,26,30,(3-9),23,25,11/27
6800000400003760002
(4-56),(7-45)
6800000400003780001
(58-70),(47-57)
6800000400003780002
(2-40),(1-35)
6800000400004900001
392023
(82-172),61,(83-113)
6800000400004900002
(12-22),48,(66-90),(3-89)
6800000400004110001
(92-142),(125-131),91
6800000400004110002
(2-150),1,(5-139)
6800000400004990001
6800000400004990002
(1-19),(25-35)
6800000400004090001
6800000400004090002
6800000400004180001
(56-90),(55-87)
6800000400004180002
18,18,(5-7)
6800000400004190001
7
6800000400004190002
(2-4),1,1,1,1,1,1
6800000400004220001
(8-26),28,(30-32),(3-41)
6800000400004220002
(4-10),(9-43)
6800000400004230001
6800000400004230002
4,6,7,8
6800000400004250001
6800000400004250002
6800000400004280001
6800000400004280002
1,153,159,(161-175),(177-255)
6800000400004370006
3800000400003310001
1-8,10-13
3800000400003270001
665814
2,7,9-13,15,8
3800000400000130001
3800000400000130002
24,25,43,51,52,54
3800000400000150004
5-7,10-14,20-28
3800000400000180001
3800000400000180002
17,18,19,96
3800000400000070001
(66-102),(67-117)
3800000400001160008
3800000400001260001
3800000400001420003
3800000400001560001
38-44
3800000400001560002
61-75
3800000400001620004
(4-80),(3-13)
3800000400001870003
3800000400001880001
3800000400001880002
3800000400001910001
9,10,12,13,14,15
3800000400001910002
(3-21),(24-32),42,44,(48-60)
3800000401500010001
3800000401500010002
3-8,21-26,36-42,(29-33),(10-14),57-59
1300000100000190005
34,44,51,65,66,68,72,1 ,53 ,(13-19),53
1300000100000190006
9,13,25,33,37,39,(40-60),68,81,83
1300000100000220005
110
1300000100000250004
(21-29),18,20,43,80,(2-8)
1300000100000250005
(49-65),67-100,(102-106)
1300000100000400003
1-32,(34-46)
1300000100000400004
(33-47),(48-66)
1300000100000400005
18,22,24,30,32,34,46,49,(53-57)
1300000100001660006
(51-57),63-71,74,76-79,146
1300000100000830003
8,10,13,15,16,23-36,(50-58),59-62,73,75
1300000100000830004
80-109,(111-117),14 
1300000100000830005
(41-47),48-60,62,64-74,(76-86)
1300000100001710005
(8-12),(19-29),36,38-40,(42-46)
1300000100001710006
61,63,75,77,88,90,94,92
1300000100001710007
73-76,78-84,(86-98),(102-106)
1300000100000550003
2,4,11,12,14-18,30,48,52,68-72,77,100
1300000100000550004
(2-10),45
1300000100000580003
56,57,59-72,83,85
1300000100000360003
2,5,7,(20-28),37,55,58,(73-81)
1300000100000360004
1,2,(3-9),10-13,(15-21),25,(36-42)
1300000100001360004
46,48,62,62 ,64¡
1300000100001360005
55-60,(63-71)
1300000100001770003
1,2,5-8,10,13,15,34-37,(41-53),61,73,75
1300000100001770004
43,(68-72),119,121
1300000100001820005
3,73
1300000100001870003
(76-96),97-100,135
1300000100002010004
(7-11),19,22,24,30,31,33,34,47,50,52,57
1300000100002010005
(61-65),66,(75-79),101-134,136-141
1300000100002010006
(143-169),1,49 ,55 
1300000100002010007
19-36,(38-50),37 
1300000100001790003
62-118
1300000100002230005
1300000100002230006
25,43
1300000100001160001
2-6,8,9,13,(19-23),24,55,57,80,14
1300000100001160002
2400000100000100001
660132
2465
04401374000
2400000100000100002
660119
21-47
2400000100000140001
2400000100000140002
(5-19),(2-26)
2400000100000170001
660118
2400000100000170002
660125
(6-30),(5-25)
2400000100000210001
660020
2466
04401377000
(32-92),(27-73)
2400000100000210002
660043
(1-35),(2-56)
2400000100000230001
660050
2461
04401365000
(131-145),(68-72)
2400000100000230002
660046
2462
04401368000
(145-149)
2400000100000270001
660021
2460
04401363000
(110-118),(101-127)
2400000100000270002
660099
31,(4-38)
2400000100000270003
660049
(33-99),(44-108)
2400000100000270004
660060
(112-128)
2400000100000450002
660010
2464
04401373000
(2-22),(1-9)
2400000100000520001
660028
2463
04401371000
2400000100000520002
2400000100000550001
660001
(11-63),(14-54)
2400000100000550002
660100
(3-7),(2-78)
2400000100000630001
(49-117),(92-154)
2400000100000630002
(119-181),(156-200)
2400000100000630003
660056
(11-47),(80-90)
2400000100000630004
(5-15),(48-74)
2400000100000710001
(115-167),(172-178)
2400000100000710002
(169-999),(180-999)
2400000100000710003
(93-101),106,108,114,116,(128-134),144
2400000100000710004
2400000100000710005
660097
(92-100),65
2400000100000710006
660017
(2-76),(5-75)
2400000100000960001
(116-118),(79-101)
2400000100000960002
(146-360),(105-145)
2400000100000960003
660048
2400000100000960004
660075
(1-19),(2-46)
2400000100001010001
2400000100001170001
(6-56),(1-89)
2400000100001170002
63,(62-70)
2400000100001230001
2400000100001230002
12,12,12,12,(14-24)
2400000100001250001
660131
(3-49),10,12
2400000100001250002
660112
2400000100001300001
660041
(15-27),9,(2-4)
2400000100001300002
660062
(4-36),(1-27)
2400000100001310001
(40-88),(29-99)
2400000100001310002
(90-100),(109-115)
2400000100001310003
53,59,97
2400000100001510001
1,3 ,(5-33)
2400000100001510002
2400000100001510003
2,4,10,18
2400000100001510004
2400000100001510005
(2-32),(33-89)
2400000100001650001
(34-92),(95-169)
2400000100001650002
2400000100001660001
1,(2-84),(5-77)
2400000100001660002
2400000100001700001
660058
(27-39),(28-38)
2400000100001700002
660074
2400000100001810001
2400000100001810002
2,4,6,6¡
2400000100001910001
2400000100001910002
2400000100002220001
(18-90),(3-59)
2400000100002220002
2400000100002460001
(53-91),109,(157-161),(167-175)
2400000100002460002
660061
(19-131),(10-90)
2400000100002610001
(155-177),(118-162)
2400000100002610002
(183-219),(164-192)
2400000100002610003
(221-289),(206-276)
2400000100002610004
(92-114),(133-153)
2400000100002610005
(44-64),(5-75)
2400000100002710001
2400000100002710002
2400000100002780001
9,(2-32)
2400000100002780002
2400000100002780003
(2-66),15,17,51,53
2400000100003010001
(57-123),(126-156)
2400000100003010002
121,(135-163),(171-197)
2400000100003240001
(15-45),(28-44),78
2400000100003240002
(63-109),(122-128),108
2400000100003240003
(1-13),(14-22),10
2400000100003240004
1,(2-6),14,(24-30)
2400000100003350001
660004
(1-49),(62-70)
2400000100003350002
660037
(115-161),(156-160),ª
2400000100003350003
(163-199),(162-184)
2400000100003350004
660093
2400000100003350005
660069
(65-83),(88-104)
2400000100003350006
660059
(32-60)
2400000100003350007
660014
2400000100003350008
660068
2400000100003610001
2400000100003610002
(40-68),(95-99)
2400000100003610003
235,246
2400000100003660001
(3-91),(22-90)
2400000100003660002
(133-177),(124-170)
2400000100003660003
(179-221),(172-230)
2400000100003660004
(233-999),(232-998)
2400000100003660005
(1-77),(2-42),88,90
2400000100003950001
(93-143),(58-86),(92-142)
2400000100003950002
(1-19),2,(6-18),70
2400000100004010001
53,65,75,81,85,87
2400000100004010002
2400000100004030001
(137-155),161,(146-180)
2400000100004030002
2400000100004030003
660018
(2-50),(1-45)
2400000100004080001
(52-70),(47-65)
2400000100004080002
1,2,4
2400000100004120001
660032
2400000100004120002
(3-35),(6-38)
2400000100004170001
37,39,47,51
2400000100004170002
(34-88),(7-67)
2400000100004210001
(73-81)
2400000100004210002
(6-18),(9-17)
2400000100004310001
(113-139),(110-138)
2400000100004310002
2400000100004350001
660055
2400000100004350002
660073
2400000100004350003
2400000100004350004
660005
2400000100004350005
2400000100004380001
(93-125),(94-120)
2400000100004380002
(1-77),(10-88)
2400000100004430001
(101-133),(118-158)
2400000100004430002
(79-99),(90-114)
2400000100004430003
2400000100004510001
(51-89),50
2400000100004510002
2400000100004510003
2400000100004510004
(1-27),2,2,2
2400000100004810001
(31-999),(4-999)
2400000100004810002
(17-33),(36-40),(44-46)
2400000100004840001
(35-41),48,(52-64)
2400000100004840002
2400000100004880001
2400000100004880002
2400000100004880003
(1-77),(2-78),79
2400000100005110001
93-119
2400000100005110002
2400000100005350001
2400000100005350002
660027
2400000100005610001
(129-999),(132-999)
2400000100005610002
(4-42),(9-45)
2400000100005690001
(46-100),(51-103)
2400000100005690002
(104-150),(105-139)
2400000100005690003
31,47
2400000100006070001
113-155
2400000100006070002
2400000100006210001
(22-999),(9-999)
2400000100006210002
2400000100006250001
(45-49),(46-999)
2400000100006250002
(42-44),(35-43)
2400000100006250003
2400000100006510001
(57-69),46,48
2400000100006510002
(1-203),(263-269)
2400000100006610001
(271-381),324
2400000100006610002
660025
2400000100006770001
62-133
2400000100006770002
2400000100006850001
2400000100006850002
2400000100006960001
2400000100006960002
2400000100007050001
(26-70),(17-39)
2400000100007050002
2400000100007110001
(119-145),(130-999)
2400000100007110002
54,(2-42),(3-53)
2400000100007140001
56,(73-75)
2400000100007140002
2400000100007260001
(11-47),(28-44)
2400000100007260002
660111
2400000100007260003
2400000100007310001
660019
2400000100007410001
(45-49),(52-58)
2400000100007410002
65-69,60,70
2400000100007410003
(26-34),33
2400000100007720001
2400000100007720002
2400000100007750001
2400000100007750002
(5-9),(12-40)
2400000100007750003
2400000100007820001
(17-63),(24-64)
2400000100007820002
2400000100007950001
2400000100007950002
(1-107),(2-62)
2400000100008060001
(123-165),(106-130)
2400000100008060002
2400000100008120001
2400000100008120002
43-87
2400000800000220001
662546
2454
04422000000
158
2400000800000220002
662548
(2-82),(7-91)
2400000800000380001
662549
(84-110),(99-107)
2400000800000380002
662541
2400000800000410001
2400000800000410002
2400000800000570001
103-126
2400000800000570002
2400000800000590001
96-133
2400000800000590002
(12-22),(1-11)
2400000800000600001
(40-86),(15-91)
2400000800000600002
(2-24),3,(7-15)
2400000800000740001
17,26,28
2400000800000740002
9,11,38,38 ,39,40,41,40 ,42,44
2400000800000780001
662544
7,7 ,7¡
2400000800000780002
662543
(150-164),(133-149)
2400000800000830001
(2-148),(1-131)
2400000800000830002
(2-56),(1-87)
2400000800000860001
(60-90),(91-93)
2400000800000860002
(1-23),38
2400000800000880001
69-74
2400000800000880002
662547
(2-92),(1-93)
2400000800001050001
(95-117),(96-118)
2400000800001050002
2400000800001180001
35,35 ,40,40 ,42
2400000800001180002
(1-93),(2-92)
2400000800001220001
(95-117),(94-118)
2400000800001220002
2400000800001240001
12,22,39,41,43,47
2400000800001240002
1,(2-58)
2400000800001250001
60-76
2400000800001250002
(1-49),(24-28)
2400000800001260001
53-59,38
2400000800001260002
(8-92),(9-93)
2400000800001420001
(95-115),(94-118)
2400000800001420002
(2-94),(1-93)
2400000800001510001
(95-117),(96-124)
2400000800001510002
(2-10),(5-15)
2400000800001540001
2400000800001540002
4,(10-20)
2400000800001590001
4 ,4¡,4¢,6 ,15,18,52
2400000800001590002
2400000800001880001
(93-125),(102-110)
2400000800001880002
2400001600001510001
663604
2450
04420000000
(33-999),(62-999)
2400001600001510002
663606
2400001700000010001
662607
2455
04423000000
(39-55),(34-58)
2400001700000010002
662608
2400001700000020001
662603
2400001700000020003
662606
(62-80),(55-61)
2400001700000020004
662610
2400001700000050001
662605
(73-81),74
2400001700000050002
(42-72),(45-71)
2400001700000050003
662602
2400001700000100001
(26-92),(27-71)
2400001700000100002
(94-999),(73-87)
2400001700000100003
(1-97),(2-52)
2400001700000120001
(99-139),(54-100)
2400001700000120002
(1-33),(32-34)
2400001700000130001
2400001700000130002
(15-19),(1-5)
2400001700000290001
2400001700000320001
(82-94),(77-85)
2400001700000320002
(1-57),(2-16)
2400001700000330001
662601
(71-103)
2400001700000330002
(2-40),(1-63)
2400001700000350001
(42-88),(65-99)
2400001700000350002
(1-45),2
2400001700000360001
2400001700000360002
2400001700000400001
(55-69),(52-74)
2400001700000400002
2400001700000420001
(26-60),(31-51)
2400001700000420002
2400001700000440001
(22-30),(45-59)
2400001700000440002
(65-165),(72-146)
2400001700000460001
(148-156),(167-231)
2400001700000460002
(2-70),(3-63)
2400001700000460003
(1-91),(2-94)
2400001700000480002
(93-111),(96-118)
2400001700000480003
2400001700000590001
(59-109),(70-114)
2400001700000590002
(73-91),(92-106)
2400001700000600001
(48-90),(35-71)
2400001700000600002
2400001700000640001
(84-998),(93-999)
2400001700000640002
(1-103),(2-90)
2400001700000680001
(105-999),(92-999)
2400001700000680002
2400001700000710001
(73-83),(74-96)
2400001700000710002
(85-143),86 ,(98-150)
2400001700000710003
(37-71),(38-72)
2400001700000710004
2400001700000760001
(2-44),(5-89)
2400001700000760002
(1-93),(2-84)
2400001700000770001
(95-999),(86-999)
2400001700000770002
(1-39),(2-20)
2400001700000790001
(22-42),(41-73)
2400001700000790002
2400001700000810001
(71-79),(70-78)
2400001700000810002
(9-69),(18-68)
2400001700000810003
75,88
2400001700000870001
(1-73),(2-86)
2400001700000870003
(1-119),(2-74)
2400001700000980001
(121-177),(76-126)
2400001700000980002
(128-999),(179-999)
2400001700000980003
2400001700001020001
(33-37),(48-54)
2400001700001020002
2400001700001110001
(58-70),(59-71)
2400001700001110002
2400001700001130001
(39-41),(54-112)
2400001700001130002
2400001700001230001
(9-35)
2400001700001230002
2400001700001230003
(1-65),(2-90)
2400001700001290001
(165-999),(196-999)
2400001700001290002
(67-163),(92-194)
2400001700001290003
(1-69),(2-60)
2400001700001330001
(71-117),(62-104)
2400001700001330002
(1-37),(2-60)
2400001700001390001
2400001700001390002
2400001700002480001
(143-275),(138-282)
2400001700002480002
(7-141),(14-136)
2400001700002480003
(1-11),(2-56)
2400001700002490001
(58-114),(13-113)
2400001700002490002
2400001700002500001
(16-96),(19-65)
2400001700002500002
2400001700002510001
(22-66),(17-37)
2400001700002510002
(2-60),(3-7),(13-17)
2400001700002520001
(62-80),(19-33)
2400001700002520002
2400001700002530001
(69-105),(32-110)
2400001700002530002
2-18,26,30,34,38-40,44,1,71
2400000500000130001
663690
2453
04537000000
46-66,70-76,78
2400000500000130002
663691
24,32,36
2400000500000130003
663694
2400000500000150001
16-18,22-28,32-34,38-44,46,48,52-68
2400000500000150002
663692
2400000100003010003
(1-9),(2-98),37
2400000100002940001
(11-35)
2400000100002940002
2400000100005330001
660022
24,26,28-37,39,41,60-78,42-44
2400000300000470001
663091
2446
04409000000
1,3-20
2400000300000470002
663094
2,4,6,8,12
2400000300000480001
663090
34-38
2400000300000480002
20-39
2400000300000390001
2400000300000390002
1-39,42-46
2400000300000410003
(142-162),170-191
2400000300000410001
41,45,(47-57),(50-80),(61-153),161
2400000300000410004
(13-19),(8-16)
2400001600003770001
663601
(38-54),(45-65)
2400001600001330001
(38-56),(49-65)
2400001600002640001
(48-66),(51-61)
2400001600003010001
2400001600001960001
(140-174),(197-199)
2400001600001440001
(2-100),(1-91)
2400001600000970001
663605
(2-102),(1-85)
2400001600001030001
2400001600000990001
2400001600000920001
(4-36),(7-43)
2400001600001330002
663611
2400001600002640002
2400001600003010002
2400001600001280001
2400001600003770002
(28-42),(13-35)
2400001600002840001
663613
2400001600001280002
(2-62),(1-37)
2400001600001350001
(104-166),(87-151)
2400001600001030002
(82-148),(83-137)
2400001600001940001
(76-154),(83-151)
2400001600002740001
(76-92),(81-107)
2400001600001000001
(102-158),(93-169)
2400001600000970002
(30-102),(31-111)
2400001600001570001
(62-96),(69-81)
2400001600000990002
(60-96),(19-85)
2400001600003940001
(2-26),(1-63)
2400001600003230001
(96-172),(53-55)
2400001600001960002
663614
(2-74),(1-61)
2400001600001440002
2400001600003030001
2400000100000440001
660006
(3-47),(2-78)
2400000100001070001
2,4,16,18,20
2400000100002150003
(79-95),(80-134)
2400000100001070002
660054
(25-337),(2-312)
2400000100000440002
660071
2400000100002150004
660079
2400000100000450001
(130-150),(194-999)
2400000100000450003
4,5,16,16,16,16,16,16,29
2400000800000270001
6,16
2400000800000430001
(8-10),20
2400000800000650001
2400000800001530001
(7-93),(12-102)
2400001700000030001
(97-133),(104-142)
2400001700000030002
2400001700000030003
2400001700002540001
(5-65),(8-68)
2400001700002540002
(7-13),(21-35),(2-34)
2400001700000290002
2400001700000600003
(37-49)
2400000100000230003
(45-59),(86-102)
2400000100001010003
2400000100001610001
660122
(1-3),(26-28)
2400000100001610002
660094
2400000100001610003
2400000100002910001
15,(4-26)
2400000100002910002
660095
2400000100003350009
(106-144)
2400000100003350010
(150-154)
2400000100003350011
2400000100003590001
(31-69),(24-44)
2400000100003590002
660003
(71-87),(46-70)
2400000100003590003
2400000100003590004
(79-91),(44-56)
2400000100003950003
(1-5),(2-999)
2400000100004250001
2400000100004250002
(79-91),(80-92)
2400000100004380003
2400000100004510005
(1-999),(2-34)
2400000100004770001
2400000100004770002
(80-999)
2400000100004770003
2400000100005110003
(1-25),(4-40)
2400000100005230001
(27-59),(42-52)
2400000100005230002
(61-999),(54-999)
2400000100005230003
2400000100005500001
2400000100005500002
(115-127),(116-130)
2400000100005610003
(383-445)
2400000100006610003
(116-128)
2400000100007110003
2400000100007490001
2400000100007490002
2400000100007490003
2400000100008170001
4,10
2400000100008170002
2400000100008300001
2400000100008300002
2400000100008320001
(25-31),(2-42)
2400000100008320002
(33-67),(44-74)
2400000100008320003
2400000100008320004
2400000100002150001
2400000100007060001
(73-87)
2400000100007060002
(23-135)
2400000100007310002
660052
2400000100008350001
660078
(46-88),(90-148)
2400000100008350002
660121
(152-160)
2400000100008350003
(5-37),(16-26),149,169
2400000100000130001
(1-4)
2400000100000130002
2400000300000410005
2400000300000470003
663092
(152-192)
2400000100000450004
(21-43),(48-80)
2400000100001010004
2400000100002150005
(109-121),(64-104)
2400000100008060003
2400000100002610006
2400000100004880004
2400000100004880005
2400001600000920002
(1-29),(31-55),(57-111)
2400500000100160001
662520
2404
04205551000
(2-30),(32-114),116,116
2400500000100160002
37/6,37,39/5,(45-55),(30-100)
2400500000100600001
39,47,51,55
2400500000100760001
(1-35),(43-49),57,59,(2-40),(50-54)
2400500000100110001
2400500000100110002
2400500000100600002
662521
(63-105),(80-108)
2400500000100110003
(113-135),(118-140),116
2400500000100160003
(3-37),(43-51),(2-22),38
2400500000100760002
2400000100004230001
2400000100004230002
660012
(3-25),(2-22)
2400000100004270001
2400000100004270002
3,5,6,8,12
2400000100004650001
2400000100004650002
(2-18),(22-34)
2400000100005290001
20,(64-82)
2400000100005290002
3,(13-25),88/1,90
2400000100005290003
2400000100006460001
(29-49),ª
2400000100006460002
(51-61)
2400000100006460003
(75-221),(4-84)
2400000100006460004
(223-259),(86-128)
2400000100006460005
2400000100006610004
(233-261)
2400000100006610005
(39-45),(28-56),ª
2400000100000130003
(49-121),(60-126),128
2400000100000130004
(20-30),ª2
2400000100004230003
2400000100001970001
13,2,2
2400000100005490001
2400000100005490002
2400000100000160001
(18-24),43
2400000100000160002
2400000100001710001
2400000100001710002
(4-22),1,3,11
2400000100001730001
24,(29-33)
2400000100001730002
2400000100001740001
1,(50-104)
2400000100001970002
2400000100001970003
(9-35),(24-32)
2400000100002050001
2400000100002050002
2400000100002090001
2400000100002090002
(7-41),(10-32)
2400000100002400001
(36-118),(43-45),121
2400000100002400002
(2-70),(45-117)
2400000100003560001
9,(25-29)
2400000100003560002
(129-143),(120-152)
2400000100000270005
47,47¡,47¢,49,70 ,70¡,70¢
2400000100002460003
(21-51),(20-112)
2400000100004010003
(1-45),(4-42)
2400000100004110001
(44-54),(47-99)
2400000100004110002
2400000100004360001
(26-54),(23-55)
2400000100004360002
7,9,42
2400000100004840003
2400000100006070003
27,(14-54)
2400000100006120001
2400000100006120002
2400000100006120003
2400000100006250004
(34-44),(51-53)
2400000100006510003
50 
2400000100006570001
(40-52),(25-33)
2400000100006570002
1,2 ,2¡
2400000100007280001
68-77
2400000100007280002
(115-133),(132-158)
2400000100003240005
1,3,19,25,27,(32-78)
2400000100003310001
1 ,31,51
2400000100003310002
(2-54),(1-15)
2400001600003940002
2400001600003030002
2400001600001000002
2400001600001570002
(74-84),(43-51)
2400001600001350002
2400001600001940002
(2-74),(1-81)
2400001600002740002
(8-26),(1-11)
2400001600002840002
(76-108)
2400001600003230002
(75-999),(74-998)
2400001700003030001
2400001700003030002
2400000100002560001
(25-77),79
2400000100002560002
82ª1,82ª2
2400000100007310003
2400000100007310005
9,9,11,11,88
2400000100005290005
2400000100000790001
660031
2400000100000790002
660124
2400000100006510005
2400001800000020001
662201
2456
04426000000
33,34
2400001800001090001
4,5,6,8,9,10,11,13 ,20,21
2400001800000060001
139-155,116,118,120 ,120
2400001800000110001
85,87,89,91,93,131,100,102,102 ,106,108
2400001800000040001
110,128,130/1,130/2
2400001800000040002
(60-999),(63-999)
2400001800001460001
(40-999),(49-999)
2400001800001340001
4/1,4/2
2400001800000540001
2400001800001870001
(42-70),(27-49)
2400001800000040003
662202
1-14,16-21,23-999
2400001800000920001
2400001800001180001
2,(4-6),(12-999)
2400001800001180002
2400001800001680001
2400001800000110002
(2-20),(1-27)
2400001800001720001
(2-24),(30-999),(1-999)
2400001800001270001
2400001800000950001
662205
2 ,8,10
2400001800001180003
2400001800001290001
36,36 ,36¡,38,38 ,38¡,40 
2400001800000040004
85¢,(87-91),(125-133),(88-106)
2400001800000110003
662206
110-114
2400001800000110004
39,39 ,41,43,45
2400001800001180004
2400001800001340002
1,1 ,1¡,3,5,7,7 ,9,11,15
2400001800001680002
1 ,1¡
2400001800000530001
662200
2400001800001460002
(51-83),(72-98)
2400001800000040005
22,49,51,53,55,57,59
2400001800001720002
(25-65),(26-64)
2400000100009540002
2400000100003610004
(71-93)
2400000100003610005
(3-45),(2-44)
2400000100003040001
2400000100003040002
48,48 ,50
2400000100003040003
2400000100005340001
2400000100005340002
(3-55),(2-54)
2400000100004900001
(57-75),45 ,(56-76)
2400000100004900002
(29-43),(32-42)
2400000100004970001
2400000100006940001
2400000100006940002
(69-79),(80-94)
2400000100006940003
(101-117)
2400000100004110003
4-36
2400000100010250001
660113
2400000100010250002
660115
2400000100010260001
2400000100010260002
2400000100010270001
72-90
2400000100010270002
660030
(25-83),(56-108)
2400000100010280001
2400000100010280002
112,114,118-126
2400000100010280003
2400000100010280004
(1-21),(26-54)
2400000100010280005
(75-93),(50-96)
2400000100006510007
(3-15),(23-57)
2400000100003980001
2400000100010300001
2400000100010300002
(130-152),(145-167)
2400000100010310001
2400000100010320001
(3-37),(2-48)
2400000100006150001
2400000100003580001
15 ,15¡,15¢,15£,15¥,15ª2,15ª3
2400000100003580002
2400000100003580005
2400000100000500001
2400000100000490001
2400000100004310003
(5-999),(6-999)
2400000100007240001
1/9,1/10
2400000100007240004
2400000100007240005
2400000100010120002
2400000100003450001
(1-29),(16-20)
2400000100003450002
11,12,15-19,23-27,31-39,45-49,61
2400000100010120001
2400000100008410002
2400000100008410003
3,5,9
2400001000000010001
662500
2458
04433000000
(2-30),(11-19)
2400001000000010002
662501
(4-42),31
2400001000000030002
2400001000000050001
(17-31),10
2400001000000050002
(2-28),(1-15)
2400001000000070001
2400001000000070002
1,3,5,5,(2-20)
2400001000000080001
(11-31)
2400001000000080002
(123-129)
2400000100010350001
2400000100010350002
2400000100010350003
2400000100010350004
1,2,3,5,9,11,13
2400001000000030001
469
2400000100006610006
473
2400000100006610007
2400000100002150006
4,(8-12),(19-25),15
2400000100002660001
(18-24),29
2400000100002660002
2400000100002660003
2400000100002660004
(137-197)
2400000100007310006
13,33
2400000100010300003
2400000100007720003
6,12,14,16
2400000100007720004
1-29,60-67
2404300000100020001
662710
2442
04259551000
(2-12),(1-13),34,35
2404300000100030001
32-43,50-59
2404300000100020002
662713
2404300000100450001
151-165
2404300000100450002
61-142
2404300000100450003
(2-62),(13-69)
2404300000100520001
2404300000100030002
662712
2400000100004110004
3300000100001050004
14-29
5301400100001110001
174510
5313
49232501000
5301400100001110002
174511
3200000100015710001
241008
3200000100015710002
3200000100015710003
3200000100015730001
(63-101),(78-148)
3200000100015730002
(103-173),(150-154),(158-174)
3200000100015730003
1,(5-13),(17-21),(25-35),(43-57),61
6100000100006050001
36,42,(63-71),81,91,107,115
6100000100006050002
(117-999),(128-150),(156-192)
6100000100006050003
(2-26),30,(102-108),(120-126)
6100000100006050004
6100000100008130001
(15-25),(31-43),(47-173)
6100000100008130002
(20-52),(56-84),(88-134),(138-162)
6100000100008130003
7101700100000370001
(2-34),(9-35)
7101700100000370002
1,1
7101700100001070001
2,(4-24),98
7101700100001070002
7101700100002400001
7101700100002400002
2,2,(3-7)
7101700100001070003
(38-56)
7101700100000340005
5600000100008160001
(1-69),(12-102)
5600000100008260001
(71-171),(104-188)
5600000100008260002
7800000000001310004
7100000100006890001
14-36
7100000100006890002
(135-175),(162-222)
7100000100001960001
(1-123),(2-154)
7100000100001960002
2200000100003270005
7400000100017750001
(66-80)
7400000900002050002
7400001100000400004
28,30,31,33-36,38
7400001100000180007
7400001100200290001
456796
75543000004
2-5,7-11
7400001100000150006
7400001100000260003
(2-22),(1-41)
5900000200004290001
5900000200004290002
5900000200004300001
(2-4),6,6,(8-16)
5900000200004300002
(126-148)
5900000200004310001
(15-17),19,19 ,(21-29),31,31 
5900000200004310002
33,33 ,(35-47),(82-124)
5900000200004310003
618422
(97-107),(150-200)
5900000200004310004
(2-52),(66-72)
5900000200004310005
(1-35),(2-50)
5900000200004320001
(37-41),(58-64)
5900000200004320002
(43-59),(66-74)
5900000200004320003
(47-61)
5900000200004330001
5900000200004330002
(24-40),(43-45)
5900000200004330003
(42-88)
5900000200004330004
(63-161)
5900000200004330005
(90-140)
5900000200004330006
(15-79)
5900000200004340001
(11-13),(6-110)
5900000200004340002
(25-53),55,57,59,61,61 
5900000200004350001
(63-107),(56-132)
5900000200004350002
(19-23),(24-54)
5900000200004350003
5900000200004360001
(44-92),(53-57)
5900000200004360002
(96-154),(63-139)
5900000200004360003
20
1800000100003580004
(44-50),41
1600000100001080001
(4-26),(5-11),15
1600000100006100001
1,4,3,5,8
1600000100013350001
(1-29),31,33,8
1600000100012260001
420006
62,66,69/32,73
1600000100013510001
1-6,8,9,12,7
1600000100015420001
3,5,9,11
1600000100015700001
10,(5-9)
1600000100001880001
1600000100001820001
1600000100002620001
2,5,8,9,47-51,53,55
1600000100016480001
1600000100016470001
1,3,(8-28)
1600000100016400001
1-25,29,49,98,102,104,108
1600000100016280001
1600000100016290001
99
1800000100004320003
5,7,23
1800000100000030003
273
3800000300000430012
267
3800000300000430013
271
3800000300000430014
295
3800000300000430015
273
3800000300000430016
257
3800000300000430017
295
3800000300000430018
295
3800000300000430019
3800000300007580001
3800000300007580002
7102400015200030003
7400000902400000001
7400000902400030001
7400000900001470003
7400000900002880005
12,14,14/16,18,45,47,49,53,55,57,59
2700000500002630004
2700000100003960001
(33-999),(18-999)
2700000100003960002
(2-80),(1-45)
3100400100000530001
(82-200),(47-199)
3100400100000530002
(38-66),(91-115)
3100400100000300001
(2-36),(1-89)
3100400100000300002
(1-31),(2-40)
3100000100005930001
2-26,74
3300300010100220001
17210565000
2-54
3300300010100240001
3300300010100260001
17-31
3300300012600020001
1-69,71,73-999
3300000100001720001
3300000100001720002
6801300005500160001
393030
6807
68220835001
6801300005500160002
7000000100009550001
7000000100009550002
7800000000015490004
3400000100013730001
3400000100013730002
(55-275)
3403200100000900005
(86-310)
3403200100000900006
(115-235)
3403200100001290003
(136-204)
3403200100001290004
(64-138)
3403200100000820006
3403200100000820007
(303-363)
3403200100001500005
(306-360)
3403200100001500006
65-185
3402100100000460002
403953
(111-251),(98-252)
3402100100000080002
3400000100024320004
1 ,5,5 ,9,(11-21)
3400000100008020001
(2-12),(16-20),24,24 ,26,26 
3400000100008020002
3400000100008020003
400052
2,4,5,12
3900000100002710001
5,7,7,8-11,13-999
3900000100002710002
3900000100009040001
3,(7-999),
3900000100009040002
1600000100010180004
3301400200000510001
601240
3335
3309
17440510000
1,21,23,25,27,29
3301400200000510002
3301400200000250001
23-44
3301400200000270001
2,4,6,23-61
3301400200000350001
1 ,3 ,10 ,6,8
3301400200000540001
3301400200000430001
601243
38,59-99
3301400200000250002
3301400200000250003
12,14,16,18,20,22,24,26,28,30,32,34,36
3301400200000250004
22,24,26,28,33-65
3301400200000510003
3,5,7,9,11-21
3301400200000540002
3301400200000550001
3301400200000270002
1,3,5,7-21
3301400200000350002
3301400200000570001
3301400100000050001
601204
17440000000
2,4,6-99
3301400100000050002
601201
1,3,5,7,8,9,11
3301400100000270001
601202
6,7,8,9,10,11,12,13,14,15,16,18,20,26,38
3301400100000040001
3301400100000040002
3,4,5,6,7
3301400100000330001
2,2 ,1,1 ,8,9,10,11
3301400100000330002
601203
2,3,5,4
3301400100000040003
5,6,4,3,2,1,7,8,26,1 ,9,12,13,15,16
3301400100000350001
18-21,24,8 
3301400100000350002
9,11,15,17
3301400100000090001
22 ,1-8,16,24,24 ,24£,25-99
3301400100000090002
3301400100000560001
1,2,3-99
3301400100000560002
3301400015500170001
601221
3323
17250557000
91-999
3301400015500170002
601220
(241-249)
5400000100001220008
(72-998)
5400000100003270004
5400000100003270005
1-24,25,26-999
3300000100003860001
3300000100003860002
1-55,56,(57-65),67-999
3300000100002390001
56/1,58,62,62,64,66
3300000100002390002
61-93
3300000100002610003
42,44,46/10,48,50,52,54,56,58,60,62,86
5003400100001310003
142802
1,3,5,7,9,11,13,20/15,5/17,25,27,29,31
5003400100001310004
1/2,4,6,8,12/10,18,20/23,33,51
5003400100001310005
1,3,9,11,10/15,17/3,19,21,23,8/25,29/9
5003400100000030001
33,35,37,39,41/8,43,45/13,47,49,51/22
5003400100000030002
49/53,55/40,57/35,59/30,61,63,65,67,69
5003400100000030003
71,16/73,75,77,79,81,83,85,87,89,91,93
5003400100000030004
8,14/12,16,18,20,22,24/10,26/28,30/23,32
5003400100000030005
34/7,20/36,20/38,40/4,42/15,44,46,48/22
5003400100000030006
50/51,52,54,56/30 ,58,60,62/2,64,70,72
5003400100000030007
5003400100000030008
5002100000400000001
142431
5031
46239819010
3300000200000140001
600910
3308
17537000000
3300000200000180001
3300000200000190001
1,2,3,4,5,6,6/1,7,25/1,25/2,50
3300000200000200001
1,2,3,4,5,6,7,8,9,11,12,13
3300000200000210001
68,71,74
2400000100007280003
5000002700003450003
5000002700003320003
5000002700000610003
15,15
5000002700003400005
5002600014800090001
142144
46246813012
9,11,11 ,15,(31-43)
5600000400036510001
71-100
5600000400030270001
462423
5600000400030270002
5600000400060180001
7-20
5600000400060180002
5600000400090120001
5600000400090120002
(1-31),2 ,2¡,2¢,4 
5600000400069390001
(2-34),35-100
5600000400069390002
1,2,3-6,7,8-999
5200000100012710001
5200000100012710002
5200000100012710003
6600000100013200005
6600002900000660002
38,46,55,57,57,57,57,61,63/2,63/3
3300000200000010001
66/4,67
3300000200000010002
8,12,18,19,32/1,32/2,32/3,35,35,35
3300000200000030001
3300000200000030002
12,12,12,41,42,43
3300000200000100001
3300000200000110001
2,3,5,6,7,8,9,10,11
3300000200000190002
27,70,71,72,73,74,90,91,92,93,94,95,96
3300000200000120001
100,101,102,103,104,105,106,125,126,127
3300000200000120002
128,129
3300000200000120003
11,11/2,14,21,23,24,25,31,32,42,45,46
3300000200000130001
62,63,83,84,84/1,86,91,92,106,107,108
3300000200000130002
109,109
3300000200000130003
(2-238),(25-33)
6600002300000150001
622004
6623
65476000000
(1-23),(35-237),239-999
6600002300000150002
622051
(35-49),53
6600002300000150003
622018
6600002300000260001
622007
1,2,3,5-999
6600002300000260002
(5-45)
6600002300000290001
622021
(16-50),61
6600002300000290002
622005
(70-136),(101-159)
6600002300000290003
622014
(19-37),(24-44)
6600002300000300001
622052
1-18,20,22,39,41,43,45-999
6600002300000300002
6600002300000360001
1-7,9,10,12-999
6600002300000360002
6600002300000390001
622048
1-3,34-999,(2-32)
6600002300000390002
6600002300000430001
1-62,64,66-999
6600002300000430002
31,35,41
6600002300000530001
1-30,32,33,34,36-40,42-999
6600002300000530002
1-14,16,16 ,16¡,22,22 ,18,20
6600002300000630001
(15-21),23-48,50,52,(61-69),71-999
6600002300000630002
(54-70),(49-59)
6600002300000630003
6600002300000640001
8-999,1-4,6
6600002300000640002
6600002300000750001
622002
1-59,61-999
6600002300000750002
622016
5,7,11,13
6600002300000830001
6600002300000830002
9,15,17,19,12-999
6600002300000830003
1,3-11,13,15
6600002300000920001
622034
2,12,14,16-999
6600002300000920002
622036
6600002300000950001
622001
6600002300000950002
1-45,(47-999)
6600002300000950003
(46-162),(99-157)
6600002300000970001
1-45,(47-97),159,161,163-999
6600002300000970002
6600002300000990001
53-74
6600002300000990002
1-30,(32-48)
6600002300001260001
29 ,(31-47),49-999
6600002300001260002
622030
6600002300001280001
1-44,46-999
6600002300001280002
622031
(69-77)
6600002300001300001
(70-76),1-68,78-999
6600002300001300002
1-29,(31-49)
6600002300001340001
34,38
6600002300001340002
(40-48),50-999,30,32,36
6600002300001340003
(1-27),6
6600002300001350001
28-999,(8-26),2,4
6600002300001350002
6600002300001380001
(25-43),1-23,45-999
6600002300001380002
(35-67)
6600002300001390001
622049
1-34,68-999,(36-66)
6600002300001390002
(1-19),2,4,2 ,4¡
6600002300001440001
20-999,(6-18)
6600002300001440002
1-17,(19-85)
6600002300001600001
(18-56),(60-66),(99-109),58,58 
6600002300001600002
86-98,110-999,(68-84),(100-108)
6600002300001600003
18-35
6600002300001620001
1-17,36-999
6600002300001620002
1-10,(12-24)
6600002300001680001
(11-23),25-999
6600002300001680002
(2-12),1,1 ,1¡,3,3 ,5
6600002300001760001
(44-86),(77-129)
6600002300001760002
(14-42),(7-75),(88-128),130-999
6600002300001760003
10-30
6600002300001800001
1-9,31-999
6600002300001800002
6600002300001810001
11-999,(1-9)
6600002300001810002
(87-117),1-85
6600002300001850001
(86-116),118-999
6600002300001850002
(243-251),253-999
6600002300001870001
1-218,(220-226)
6600002300001870002
(228-252),(219-241)
6600002300001870003
31-999,(21-29)
6600002300002130001
(6-30),(3-19)
6600002300002130002
1,(2-14),31-999,(21-29)
6600002300002280001
(16-30),(3-19)
6600002300002280002
6600002300002300001
1-5,9-999
6600002300002300002
(8-44),(11-115)
6600002300002330001
(46-998),(117-999)
6600002300002330002
6600002300002360001
1,3,5,7-999
6600002300002360002
31-999,(1-29)
6600002300002480001
6600002300002480002
15-27,(1-13)
6600002300002490001
28-999,(2-14)
6600002300002490002
(97-153),1-95,155-999
6600002300002520001
6600002300002520002
6600002300000060001
6600002300000060002
1-24,(26-36)
6600002300002710001
(25-35),37-999,71 
6600002300002710002
3-26,28,30
6600002300002920001
31-999,27,29,1,2
6600002300002920002
1,5,9,9 ,10,11 ,13
6600002300003000001
3,7,11,12,14-999,(2-8)
6600002300003000002
1-39,(68-98),(41-67),100-999
6600002300003110001
(40-66),(69-99)
6600002300003110002
1-30,43-56,72-999
6600002300003330001
(32-38),(57-61)
6600002300003330002
(31-39),40,42,42 
6600002300003330003
(58-68),(63-71)
6600002300003330004
622042
6600002300003400001
6600002300003400002
6600002300003540001
21-999,(1-19)
6600002300003540002
3,5-20
6600002300003610001
2,4,21-999
6600002300003610002
(6-20)
6600002300003710001
1-5,21-999,(7-19)
6600002300003710002
(40-52),54-999,2,19,21
6600002300003790001
(4-38),(29-53)
6600002300003790002
2 ,2¡,(1-17),23,25,27
6600002300003790003
6600002300003820001
25,27-999
6600002300003820002
6600002300003900001
6600002300003900002
6600002300003970001
4,6,(5-17)
6600002300003970002
(8-16),18-999
6600002300003970003
1-18,20,22
6600002300004000001
(19-35),(24-40)
6600002300004000002
6600002300004000003
1-28,(30-64)
6600002300004040001
(29-63),65-999
6600002300004040002
(43-49),1-41
6600002300004150001
(42-48),50-999
6600002300004150002
(2-46),13
6600002300004160001
47-999,(1-11),(15-45)
6600002300004160002
6600002300004580001
6600002300004580002
6600002300004650001
6600002300004650002
6600002300004790001
6600002300004790002
(1-57),(12-76)
6600002300004800001
(59-75),(2-10),77-999
6600002300004800002
6600002300004810001
6600002300004810002
63-93
6600002300004850001
1-62,94-999
6600002300004850002
(58-112),(75-109)
6600002300004990001
1-57,(59-73),111,113-999
6600002300004990002
1,3,2 ,6,13,19
6600002300005380001
2,4,5,7-12,14-18,20-999
6600002300005380002
6600002300005420001
(2-14),16-999
6600002300005420002
(243-251),(220-226),253-999
6600002300005670001
1-218
6600002300005670002
6600002300005670003
6600002300005680001
66-999
6600002300005680002
6600002300005710001
6600002300005710002
6600002300005810001
6600002300005810002
63-133
6600002300005970001
1-62,134-999
6600002300005970002
3,5-28,30
6600002300006010001
1,2,4,31-999,29
6600002300006010002
1,(3-9),(10-14)
6600002300006040001
(28-34),(42-64),(81-89),1 ,1¡
6600002300006040002
16,18,20,22
6600002300006050001
20¡,1-15,17,19,21,23-61,63,65,67,69-999
6600002300006050002
(12-66),(5-59),(86-998),(95-999)
6600002300006330001
1,1 ,2,2 ,3,4,6,8,8 ,10,10 
6600002300006330002
(68-84),(61-93)
6600002300006330003
(14-30),1-12
6600002300006370001
31-999,(13-29)
6600002300006370002
(2-16),(26-52),54-999
6600002300006380001
1,1 ,11,11 ,(3-9),(13-47)
6600002300006380002
(18-24),(49-53)
6600002300006380003
66-125
6600002300006440001
1-65,126-999
6600002300006440002
(1-9),(24-36)
6600002300006460001
622013
(19-37),(44-56)
6600002300006460002
6600002300006460003
(10-16),2-8
6600002300006470001
17-999,(9-15)
6600002300006470002
6600002300006630001
6600002300006630002
6600002300006670001
6600002300006670002
6600002300006790001
6600002300006790002
6600002300006800001
6600002300006800002
26-35
6600002300006850001
1-25,36-999
6600002300006850002
1-10,212-999
6600002300002010001
(11-209)
6600002300002010002
(2-12),(28-74),14,16,18,20,22,24,26
6600002300006450001
14 ,16 ,18 ,20 ,22 ,24 ,26 
6600002300006450002
(1-7),84-999,(76-82)
6600002300006450003
(9-83)
6600002300006450004
622047
6600002300004770001
6600002300004770002
4,6,9,12,16,24-131
6600002300004280001
622008
(1-7),(11-17),2,8,10,14,18-23,132-999
6600002300004280002
622022
2,8,10,14,(18-22),(132-998)
6600002300004280003
29,34,40-999
6600002300003840001
35,36,37,37/38,38,39
6600002300003840002
1-28,30-33
6600002300003840003
6600002300002530001
6600002300002530002
1,2,5,8-999
6600002300002620001
3,4,6,7
6600002300002620002
6600002300002760001
6600002300002760002
(110-998),(20-28),(36-42),44,44 
6600002300002730001
1,3,5,(29-37),(30-34),46,48,48 ,50
6600002300002730002
6600002300002730003
52,52 ,54,56,96,96 ,98
6600002300002730004
(58-94),100,100 ,(102-108)
6600002300002730005
6600002300002730006
(7-27),(39-81),(109-999)
6600002300002730007
1-20,44-63,(22-42)
6600002300002410001
(65-109),(113-123),(74-80)
6600002300002410002
86,88,111,111 
6600002300002410003
(137-141),(145-163),(192-196)
6600002300002410004
84,84 ,143,143 ,190 
6600002300002410005
21,(64-72)
6600002300002410006
(1-31),(49-999),42-45,36,38,38 ,48,48 
6600002300002160001
40,46
6600002300002160002
(2-32),(50-998)
6600002300002160003
(33-41),34,47
6600002300002160004
(34-38),(59-73),98,116
6600002300002320001
9,11,13,13 ,29,29 ,29¡,29¢,30,31,31¡,32
6600002300002320002
33-36,38,39,41,41 ,43,45,49,(40-96)
6600002300002320003
(2-14),(20-28)
6600002300002320004
3300000100002140008
4602000100000900001
999
6100000100019940001
6100000100004350002
(2-800),(1-799)
6100000100019950001
6100000100020080001
6100000100020590001
6100000100019990001
6100000100015300001
6100000100014200001
6100000100009160001
119,(156-160),164,(170-176),184
3600000100004730011
(19-29),28,(43-47),56,66
3600000100006530003
3600000100005450001
14,16,33,(43-47)
3600000100005450002
1 ,2
4100000100004150003
4100000100000320003
6400000100001000005
1ª2
3200000100000430008
200 
3400000100004780005
(131-175)
3400000100026440005
3400000100026440006
3401500100001620001
3401100100001870003
403881
(48-52),(63-67)
3401100100002040002
3400000100026200015
400098
8,20
3400000100026460005
(169-191)
3400000100024860003
(180-192),(198-202)
3400000100024910001
3400000100013140002
3300000100002540007
25,27,38,40-46
3300000100002540001
1-6,(9-19)
5301400100000450001
(8-18),20-107
5301400100000450002
5301400100000710002
2-14,16,18-40
5301400100000710001
5900000100009900005
114 
5900000200004310006
49,51,51,(53-55),57,57 
5900000200004310007
(59-63),65,65,(67-95)
5900000200004310008
17,17 ,19,19 
5900000200004340003
61,61 ,(63-75)
5900000200004320004
131,131,(133-159)
5900000200001250003
32,32 ,(34-40)
5900000200001010003
19,19 ,23,23 
5900000200001010004
21,(25-37)
5900000200001010005
94,94 
5900000200004360005
(52-68),70,70 
5900000200003160005
(54-62),(74-80)
5900000200004310009
115,115,2,4,4,60
5900000200002630003
52,52,54,54,91,91,93,93
5900000200002630004
19,19,55,55,(57-63)
5900000200001210003
5900000200001210004
49,49 
5900000200001210005
1500000100000380001
362002
1515
90401362000
(162-998),(181-999)
1500000100000570001
362000
1516
1504
90401374000
(2-160),(1-179)
1500000100000570002
1501
(148-156),157-999
1500000100000620001
(2-146),(1-155)
1500000100000620002
1500000100000920001
1502
90401364000
75-999
1500000100000920002
1503
90401370000
(182-998)
1500000100001010001
(2-180)
1500000100001010002
1500000100001350001
(3-67)
1500000100001350002
(1-315),(2-398)
1500000100001360001
(317-399),(400-999)
1500000100001360002
(1-129),(2-152)
1500000100001460001
(131-999),(154-998)
1500000100001460002
(5-99)
1500000100001480001
1500000100001480002
(1-229),(2-256)
1500000100001670001
(231-998),(258-999)
1500000100001670002
(132-998),(145-999)
1500000100001680001
(2-130),(1-143)
1500000100001680002
(1-141),(2-142)
1500000100001930001
143-999
1500000100001930002
1-143
1500000100001950001
144-999
1500000100001950002
1500000100002170001
1500000100002170002
1500000100002170003
1500000100002180001
1500000100002180002
1500000100002180003
1500000100003060001
362027
1500000100003130001
1500000100003130002
1500000100003340001
27-99
1500000100003340002
1500000100003600001
44-100
1500000100003600002
(2-324),(1-333)
1500000100003680001
(326-998),(337-999)
1500000100003680002
1500000100004100001
156-999
1500000100004100002
1-242
1500000100004730001
244-999
1500000100004730002
5500000100000900001
(4-998),(1-999)
5500000100000900002
5500000100002310001
(6-40),(3-35),1ª1,1ª2,1ª3,1ª4,1ª5
5500000100002310002
(1-47),(2-8)
5500000100014110001
(49-999),(10-998)
5500000100014110002
5500000100001970001
5500000100001970002
5500000100005370001
24,(27-33)
5500000100005370002
5500000100004090001
5500000100004090002
5500000100005430006
644002
2400000100010370001
3800000400000200002
3800000300006940001
(49-999),(40-998)
3800000300006940002
(53-141),(62-158)
7400000100007560007
(143-181),(160-172)
7400000100007560008
(183-213)
7400000100007560009
(289-293)
7400000100007560010
454136
(307-329)
7400000100007560011
7400000100019480001
100,100 ,102
5900000200001250004
22 ,28 
5900000200001210006
4800000100000440001
398036
4800000100000440002
398046
(1-305),(335-383),(2-384)
4800000100000970001
398026
(307-331),333/1
4800000100000970002
398056
2
4800000100000970003
398007
4800000100001470001
(12-18),70
4800000100001470002
398058
7800000000003420005
7100000100005050003
70401000000
(70-118)
6300001000001190004
6300000100004940006
6300000100004940001
6300000100003530001
20-30
6300000100003530002
1/6,(9-13),23,2,22/1,22/2,(24-34)
1600000100006210003
1,12,14,19,17
1600000100044090001
(2-44),(1-65)
5501600100000170001
646104
5523
52413000000
5501600100000170002
646101
5501600100000040001
5501600100000040002
646103
5501600100000320001
5501600100000320002
(2-76),(1-107)
5501600100000350001
(90-998),(109-999)
5501600100000350002
5501600100000400001
13,33-999
5501600100000400002
5501600100000410001
5501600100000410002
5501600100000520001
5501600100000520002
5501600100000540001
5501600100000540002
5501600100000760001
5501600100000760002
150-999
5501600100000770001
1-149
5501600100000770002
(2-58),(1-73)
5501600100000310001
(60-998),(75-999)
5501600100000310002
5503000100000080001
646330
5537
52418000000
5503000100000080002
646332
5503000100000200001
646331
5503000100000200002
646333
5503000100000230001
646334
(30-74),(35-107)
5503000100000230002
(76-998),(109-999)
5503000100000230003
5503000100000260001
(82-998),(75-999),69
5503000100000260002
(2-56),(1-71)
5503000100000270001
(58-998),(73-999)
5503000100000270002
(30-68),(9-43)
5503000100000330001
5503000100000330002
(70-998),(49-999)
5503000100000330003
5503000100000340001
5503000100000340002
(2-36),(1-23),25
5503000100000360001
(38-156),(27-133),25
5503000100000360002
(160-998),(135-999)
5503000100000360003
5503000100000370001
(16-998),(19-999)
5503000100000370002
5503000100000460001
5503000100000460002
(2-64),(1-55)
5503000100000420001
(66-998),(57-999)
5503000100000420002
5503000100000430001
5503000100000430002
1-31,(32-50),54,56
5503000100000480001
(58-998),(33-999),52,52
5503000100000480002
5503000100000550001
(78-998),(65-999)
5503000100000550002
5503000100000570001
(82-998),(83-999)
5503000100000570002
5503000100000590001
5503000100000590002
5503000100000630001
5503000100000630002
(2-70),(1-61)
5503000100000640001
(72-998),(63-999)
5503000100000640002
5503000100000660001
5503000100000660002
22-128
5502800100000020001
646530
5535
52415000000
5502800100000020002
646531
1,2-51
5502800100000340001
1,1
5502800100000340002
5502800100000400001
(52-144),(51-133)
5502800100000400002
646535
(146-998),(135-999)
5502800100000400003
5502800100000490001
5502800100000490002
5502800100000540001
36-105
5502800100000540002
5502800100000670001
(64-112),(45-51)
5502800100000670002
(114-998),(53-999)
5502800100000670003
(2-48),(1-43)
5502800100001630001
(50-998),(45-999)
5502800100001630002
5502800100000940001
(42-998),(47-999)
5502800100000940002
5502800100001130001
5502800100001130002
5502800100001230001
5502800100001230002
(2-24),(1-43)
5502800100001590001
(26-998),(45-999)
5502800100001590002
5502800100000470001
(38-998),(35-145)
5502800100000470002
5502800100000080001
(26-998),(33-999)
5502800100000080002
5502800100000100001
5502800100000100002
5502800100000120001
5502800100000120002
5502800100000130001
5502800100000130002
5502800100000140001
5502800100000140002
5502800100000150001
28-999
5502800100000150002
5502800100000390001
199-999
5502800100000390002
646536
(2-68),(1-61)
5502800100000810001
(70-114),(63-105)
5502800100000810002
(116-998),(107-999)
5502800100000810003
5502800100000440001
48-999
5502800100000440002
5502800100000630001
(12-38),(9-49)
5502800100000630002
(40-998),(51-999)
5502800100000630003
(2-66),(1-81)
5502800100000760001
(68-998),(83-999)
5502800100000760002
(2-72),(1-63)
5502800100000820001
(74-998),(65-999)
5502800100000820002
(2-60),(1-71)
5502800100000850001
(62-998),(73-999)
5502800100000850002
5502800100001080001
(70-998),(67-999)
5502800100001080002
5502800100001100001
(36-998),(43-999)
5502800100001100002
(2-44),(1-37)
5502800100001600001
(46-998),(39-999)
5502800100001600002
5502800100001610001
(30-998),(47-999)
5502800100001610002
(2-78),(1-59),61
5502800100000370001
(80-998),(63-999),61
5502800100000370002
5502800100000900001
5502800100000900002
(2-80),(1-61),(65-73)
5502800100001390001
63,(82-998),(75-999)
5502800100001390002
(2-22),(1-81)
5502800100001300001
(24-998),(83-999)
5502800100001300002
(147-999)
5502800100000470003
4300800200000650003
(11-123)
5600000100003080001
5600000100003080002
5600000100003440001
(18-20),(17-19)
5600000100003440002
5600000100003130003
0201100100002780001
0201100100002780002
0201100100002780003
0201100100000020007
(86-124)
0201100100000020008
(81-109)
0201100100000020009
0201100100000020010
(78-112)
0201100100000880011
0201100100001560001
0201100100001560002
(16-58)
0201100100001560003
84¡
0201100100000290005
453510
0201100100003810001
0201100100003810002
0201100100000920001
0201100100000910011
(79-91)
0201100100000910012
0201100100000930005
0201100100000930006
0201100100000870001
0201100100000870002
0201100100000870003
0201100100000890001
0201100100000890002
(87-95)
0201100100000890003
(92-104)
0201100100000890004
0201100100001370001
0201100100001370002
(96-128)
0201100100001370003
0201100100001370004
0201100100000350001
0201100100000350002
0201100100000350003
0201100100000350004
0201100100000350005
0201100100000350006
0201100100000350007
0201100100000410001
0201100100000410002
0201100100000410003
0201100100000410004
(8-74)
0201100100002510001
(9-65)
0201100100002510002
0201100100002510003
0201100100002510004
0201100100000850001
(4-94),(1-95),2
4200000900002080001
2¡
4200000900002080002
4200700100000850003
4200700100000850004
(17-49)
4200700100000850005
(28-86)
4200700100000850006
1 ,2-10,13-17,19-26,28-38,41/27,42/26
7600000100005500001
43-50,52,54-55
7600000100005500002
7600000100005500003
(27-69),(28-68),82,84
7600000100003750001
(1-11),15,2,(6-14),61,76,(79-81),82
7600000100007130001
17,(16-26),4,2¢,2£,2¥,13
7600000100007130002
(4-10),16,(22-34)
7600000100001840006
5500000100062530001
644044
5,6,7
5500000100062530002
21,24,26
5501600100000480001
1-20,22,23,25,27-999
5501600100000480002
5501600100000130001
5501600100000130002
1-14,17-999
5501600100000460001
15,16
5501600100000460002
5501600100000570001
5501600100000570002
1-3,6-999
5501600100000780001
5501600100000780002
1-4,6-13,16
0900400001200000001
369244
0919
91215557000
0900400000700030001
369222
91215000012
(2-10),1,3
4800000100001690001
(7-19),(12-52)
4800000100001690002
4800000100000100001
(29-41),(32-38)
4800000100000100002
4800000100002080001
(21-29),(20-30)
4800000100002080002
25,25
4800000100002230003
(17-41),(20-54)
4800000100002320001
398013
4800000100002320002
398006
5,5
4800000100002360003
4800000100002380001
4800000100002380002
4800000100002380003
4800000100002560001
(37-101),(34-88)
4800000100002560002
4800000100002680006
4800000100002860001
(67-135),(48-100)
4800000100002860002
1,1,(4-10)
4800000100002870001
398017
4823
42401365000
(3-7),(12-16)
4800000100002870002
398005
(3-23),(2-28)
4800000100003080001
(25-49),(34-42)
4800000100003080002
4800000100003350001
(7-11),(4-12)
4800000100003350002
8,(3-35)
4800000100003430001
(37-57),(14-26)
4800000100003430002
(1-33),35,(2-10),(14-26)
4800000100003640001
(28-44)
4800000100003640002
6,6,(8-12)
4800000100003740007
4800000100003870003
2,7,(11-21)
4800000100003900001
4800000100003900002
1,1,(9-39),(2-14)
4800000100004110001
3,5,16
4800000100004110002
(45-57),(65-121)
4800000100004180001
(30-78),80
4800000100004180002
1,3,3,(21-25),(29-83),87,(2-104),19
4800000100004300001
5,5,11,17,19,27
4800000100004300002
(89-95),(106-114)
4800000100004300003
4800000100004300004
(1-3),2,2,4
4800000100004440001
4800000100004440002
4800000100004530001
(13-31),(12-30)
4800000100004530002
(5-7),4
4800000100004610001
(13-17),14
4800000100004610002
(1-7),(8-44)
4800000100005090001
4800000100005090002
4800000100005300001
(61-139),(62-142)
4800000100005300002
(3-29),(2-24)
4800000100005320001
(31-39),(26-50)
4800000100005320002
4800000100005450001
(19-71),(14-58)
4800000100005450002
(1-11),15,(2-10)
4800000100005590001
13,13,13,(17-37)
4800000100005590002
10,(12-42)
4800000100005590003
4800000100005610001
4800000100005610002
1,3,7,11,(2-6)
4800000100005800001
4800000100005800002
(3-11),(2-14)
4800000100006090001
(17-43),(24-40)
4800000100006090002
4800000100003370001
2,5,6,1
4800000100003370002
4800000100003370003
4800000100004230001
1,4
4800000100004230002
(1-73),(4-118)
4800000100005430001
(89-205),(120-184)
4800000100005430002
4800000100003070001
398014
4800000100003070002
4800000100003540001
4800000100003540002
398040
4800000100004400001
4800000100004400002
4800000100005470001
4800000100005470002
(162-164)
4800000100005560001
1-161,163,165-999
4800000100005560002
4800000100005960003
6000000100001170003
0900400001700070001
369237
91215000013
0900400001700010001
0900400001800010001
369245
91215000007
0900400001800120001
0900400001800020001
0900400000500050001
369236
91215000009
0900400000500040001
8/1,8/2,8/3,8/4,8/5,8/6,8/7,8/8,8/9,8/10
5400000100002170004
8/11,8/12,8/13,8/14,8/15,8/16,8/17,8/18
5400000100002170005
8/19,8/20,8/21
5400000100002170006
5400000100002170007
5400000100002170008
6,6/3
5400000100002170009
5400000100007820003
7800000000010430001
7800000000010430002
7800000000010430003
4200001500003840001
652600
4202
32407000000
(71-400),(90-400)
4200001500003840002
652612
(1-11),(8-16)
4200001500000240001
(13-45),(18-36)
4200001500000240002
4200001500000420001
(54-58)
4200001500000420002
4200001500000420003
652618
(1-31),35,(24-38)
4200001500000500001
(37-135),33,(40-140)
4200001500000500002
4200001500000700001
(33-51),(40-56)
4200001500000700002
4200001500000920001
(111-253),(112-242)
4200001500000920002
(121-139),(118-142)
4200001500000590001
(141-149),(144-198)
4200001500000590002
(1-119),(2-116)
4200001500000590003
652615
4200001500001170001
(41-141),(36-124)
4200001500001170002
(13-25),(6-22)
4200001500001440001
(27-33),9,6,(30-200)
4200001500001440002
(29-95),(36-98)
4200001500000520001
(97-185),(100-400)
4200001500000520002
(5-47),(2-28),54,54,64,51
4200001500001600001
(53-200),49,(50-52),(56-62),(66-200)
4200001500001600002
(27-99),(104-126),(140-170)
4200001500001870001
(101-305),(172-306)
4200001500001870002
(7-25),(2-102),1,1
4200001500001870003
4200001500002570001
23-100
4200001500002570002
4200200004900500001
652680
32201000001
4200200004900500002
652681
1-4,6,8,10
7200600000100510001
626242
7212
71213860001
7200600000100510002
626241
7200200000100160001
627540
7208
71203802001
7200200000100160002
7200200000100160003
7200200000100200001
7200200000100200002
7200200000100220001
7200200000100280001
7200200000100280002
7200200000100020001
7200200000100020002
7200200000100030001
7200200000100040001
7200200000100100001
2,25,27-999
1600000100048690001
1600000100048690002
1-36,38-48
3500100000900000001
160508
3529
3507
19220880001
3500100001300000001
160510
19220884001
3500100002900000001
160514
19220884024
3500100029600000001
160502
19220868054
1-6,10,12-16
3500100036500000001
160531
19220882038
3500100001000000001
160537
19220816001
3500100037800000001
160524
19220864035
3500100001600000001
160503
19220868001
2200000100006890004
3-42
4700500006700000010
188671
4703
41212842006
4700500012900000001
188670
41212842008
4700500004200000001
188665
41212824004
4700500054600000001
188682
41212824003
4700500008500000001
41212824007
4700500011100000001
41212824011
4700500000300000001
41212824013
4700500054700090001
188689
41212824009
4700500009600000001
41212824008
105-114
4700500009600000002
4700500009600000003
79-97
4700500009600000004
4700500009900000001
41212824010
1-112
4700500005700000001
188663
41212558000
4700500008800000001
188661
41212828008
4700500002900000001
41212812001
4700500014100000001
41212812007
4700500013100000001
41212812005
4700500003300000001
188680
41212816010
4700500005900000001
41212816011
4700500005200000001
41212816009
4700500012200000001
41212816018
4700500009400000001
188640
41212816014
4700500012700000001
41212816017
4700500004600000001
41212816001
4700500012100000001
41212816016
4700500000400000001
41212816020
4700500004500000001
41212816004
4700500000600000001
188685
41212816002
4700500004100000001
41212816006
4700500003500000001
41212816007
4700500013300000001
41212816019
4700500004900000001
41212816008
4700500007000000001
41212816012
4700500001600000001
41212816003
4700500013600000001
188679
41212563009
4700500013500000001
41212563010
4700500010900000001
41212563007
4700500055600000001
41212563000
4700500005100000001
41212563003
4700500002500000001
41212563002
4700500001900000001
41212563001
4700500004800000001
188660
41212802003
4700500011300000001
41212802007
4700500013800000001
41212802009
4700500007800000001
188652
41212802005
4700500007900000001
41212802004
4700500012500000001
188664
41212802008
4700500200500000001
188650
41450000000
4700500002700000001
188681
41212839002
4700500001500000001
188686
41212839014
4700500008300000001
41212839005
4700500003700000001
41212000000
4700500055700000001
188675
41212839001
4700500007300000001
41212839003
4700500008700000001
41212839007
1-265
4700500010600000001
4700500009300000001
41212839008
4700500011200000001
4700500012600000001
41212839012
4700500003400000001
41212848002
4700500004000000001
188676
41212848003
4700500013700000001
41212848001
4700500053100000001
41212848008
8-79
4700500053200000001
41212848015
4700500051500000001
41212568005
4700500051600000001
41212568004
1-317
4700500009000000001
41212568008
4700500051100000001
188683
41212568002
4700500051300000001
41212568001
4700500051400000001
41212568003
4700500051800000001
188653
4700500051700000001
41212568010
4700500055900000001
4700500005300000001
41212568009
4700500051200000001
41212568011
4700500004300000001
41413000001
1-131
4700500056000000001
4700500010200000001
41212802006
1-224
4700500012300000001
188654
41212820020
4700500001300000001
188696
41212820021
4700500002800000001
188658
41212820008
4700500011000000001
41212842001
4700500008000000001
4700500011600000001
41212568000
4700500002400000001
188684
41212554000
4700500051900000001
4700500014000000001
41212812006
4700500052400000001
4700500013400000001
188651
4700500051000000001
4700500013200000001
41212824012
4700500013000000001
41212839013
1-250
4700500012800000001
41212575000
4700500012400000001
41212812004
4700500005000000001
41212842002
4700500011900000001
4700500011800000001
4700500011500000001
41212856006
1-230
4700500010800000001
41212567000
4700500010700000001
188667
41212575004
4700500010400000001
41212804011
4700500010100000001
41212848009
4700500052500000001
4700500010000000001
41212554001
4700500009700000001
41212816015
4700500054700000001
4700500009500000001
41212816013
4700500008900000001
41212575003
4700500052900000001
4700500008600000001
41212820015
4700500055300000001
4700500008200000001
41212828001
4700500007700000001
188851
41212856004
4700500007500000001
188657
41212820014
1-199
4700500007200000001
41212848017
4700500007100000001
41212856002
4700500006900000001
41212824006
4700500006800000001
188668
41212824005
4700500006600000001
41212820012
4700500006500000001
188656
41212820011
1-299
4700500006400000001
41212804008
1-399
4700500006300000001
188672
41212804007
4700500006000000001
41212558002
4700500005800000001
41212820001
4700500005600000001
41212558001
4700500005500000001
41212812002
4700500052600000001
4700500050400000001
41212816000
4700500003800000001
41212808004
4700500003200000001
41212808005
4700500053000000001
4700500002600000001
41212820007
4700500002300000001
41212856008
4700500001400000001
41212824001
4700500001200000001
41212808002
4700500001000000001
41212820004
4700500000900000001
41212804002
4700500000800000001
41212802001
4700500000700000001
41212804001
4700500055100000001
4700500100000000001
41413000000
4700500200300000001
4700500200200000001
4700500200400000001
018865
3200000100001050001
(53-63),(42-74)
2301800100001190004
3200000100015730004
15208855001
97 ,131
3200000100005540004
5200000300000370004
5200000300000510001
(18-22),(17-33)
5200000300000510002
37 
5200000100012020003
2-19,24,26,28,30,34,36,38,40
7600100064800000001
150515
7627
78250860002
2-14,16,18,20,22
7600100004300000001
78250845003
1-14,16,17,19,20-25,27,28
7600100006300000001
78250845004
1,2,3,4,5,7
7600100010000000001
78250875010
7600100010700010001
150516
78250870025
1-8,10,13-18
7600100021600000001
150532
78250845008
7600100024000000001
78250845010
7600100024100000001
78250845009
7600100065200000001
78250810000
7600100065000000001
7600100064900000001
1-11,13,15,17,19,21,23,25,27,29
7600100027300000001
78250845023
7600100030100000001
78250875024
2-9,11
7600100030800000001
78250845012
1-9,11-13
7600100031000000001
78250845013
7600100034500000001
78250845014
2-14,16,17,19,23
7600100040800000001
78250845015
1-13,15,17,19
7600100041800000001
78250845016
1-7,15,17,18,20
7600100044500000001
78250845017
1-4,11,15,16,18,19,21,23,25
7600100046100000001
78250865036
7600100047400000001
78250845019
1,3,5,6,7,8,10,12,16,18,30
7600100055700000001
78250845020
7600100058100000001
150517
78250870023
1-10,12,14,16,18,22,24,26,28,30
7600100058500000001
78250845022
1,2,3,5,7-20,24,26,28,30,32,34,36,42,44
7600100001200000001
150503
78250892003
7600100001200000002
2,3,4,6-12,14,16
7600100005400010001
78250810003
11,20,22,25,26,28
7600100005400020001
78250000000
7600100005400030001
1,10,11,12,14,21,23,24,25,27,28,28 ,29
7600100009200010001
78250810004
32,34,36
7600100009200010002
2,4,6,7,8,9,11,12,13,14,15,16
7600100009200020001
7600100009200030001
2,4,6,9,11
7600100019500000001
78250810005
1-6,8,10,12,14,16,17,19,22-27
7600100027100000001
78250810006
2,3,5,11,16,19,22,24,26,28,30,34,38,40
7600100027700000001
78250810007
5,10,11,25,29,31,33,47,49,51
7600100028600010001
78250810008
2,4,8,11
7600100028600020001
7600100028600030001
1,1 ,2-7,8 ,8,9-32
7600100043000020001
7600100043000050001
7600100043000030001
3,5,6,7,9,11,13
7600100043000060001
7600100043000040001
1-3,5-9
7600100043000010001
7600100043000070001
1-9,11-14,16-19,21,23,25,29
7600100046000000001
78250810011
9,11,25,36
7600100046600000001
78250810012
1,2-14,17,18,22,26,27,28
7600100050800000001
78250810013
3,5,7,9-21
7600100056900000001
78250810014
7600100029500010001
78250810009
1-4,6-12,14
7600100000900000001
150542
78250892002
3,4,5,7,8,9
7600100003700000001
78250892004
7600100010500000001
78250892005
7600100011500000001
150511
78250835000
7600100063200000001
78250892008
7600100014200000001
78250892009
7600100015100000001
78250892010
1-3,9,11,13,17,20,21,22
7600100016400000001
78250892011
7600100018200000001
78250892013
2-5,7,10-13,16-23
7600100018400000001
78250875016
1-14,16,17,19,21,22,24,25,26,27
7600100020800000001
7600100063300000001
7600100021800000001
7600100022500000001
7600100022700000001
3,4,7,8,9,12-17
7600100025700000001
4,6,7,8,10,11,12,13
7600100026000000001
78250892021
1-6,8-13
7600100026800000001
78250892022
7600100028300000001
78250892023
1,2,3,6
7600100029900000001
78250892024
7600100031900000001
78250892049
7600100034400000001
78250892026
1,4-31
7600100035200000001
78250892027
7600100036100000001
78250892028
7600100039100000001
150501
78250892030
7600100039900000001
150527
78250892031
7600100041000000001
78250892032
1,3-8,10,11,13
7600100043200000001
78250892033
7600100043300000001
78250892034
1,2,4,6,11
7600100044000000001
78250892035
1,2,3,5-9,11,13-16
7600100044200000001
78250892036
1-7,9,10,11
7600100045700000001
78250892037
7600100045900000001
78250892038
1,2,4,5,6,10-17,19
7600100048800000001
78250892001
1-13,15,16,17,18,19,20,21
7600100049400000001
78250892040
1,2,3,5-13
7600100051600000001
78250892041
1,2,3,6-15,17
7600100052500000001
78250892042
1,2,3,4,4 ,5-8,10-20
7600100052600000001
78250892043
1,3,6,9,16
7600100052700000001
78250892044
1,2,4,6,8-13,15,21
7600100052900000001
78250892045
3,4,5,7-15
7600100054200000001
78250892046
1,3,4,6,7,9
7600100054700000001
78250892047
5,7,9,12
7600100055600000001
78250892048
1-27,29,31,42
7600100000800000001
150518
78250875002
7600100004000000001
150504
78250875003
1-21,23,25
7600100004500000001
78250875004
1,1 ,2,2 ,3-6,7 ,7,8-16
7600100005500000001
78250875005
1-14,16-32,34,36,38,40
7600100006100000001
78250875006
1,1 ,2-18,20,22,24,26,28,30,32,34
7600100006200000001
78250875007
1,2,3,3 ,4,4 ,5,6,6 ,7-29,31
7600100006400000001
78250875008
1-16,17 ,17,18-21,23,26,34-36,37-39
7600100009700000001
78250875009
41-50,53,54
7600100009700000002
7600100014000000001
78250875011
1-38,39,39 ,40-76
7600100014900000001
78250875012
1-12,13,13 ,14-28
7600100015700000001
78250875013
1-27,28,28 ,29-46,48,50,52,54
7600100020600000001
78250875017
1-32,34,36
7600100023000000001
78250875018
1,2,4,7,8,11-19,25
7600100024800000001
78250875019
1,4,4 ,5-11,12,12 ,13-18,19-22,24-27
7600100024700000001
78250875020
28 ,28,29-34,36,37,37 ,38,39
7600100024700000002
1,2,5-11
7600100061300000001
7600100025800000001
78250875021
1-15,16,16 ,17,17 ,18-24
7600100027800000001
78250875022
7600100028900000001
78250875023
1-18,19,19 ,23,25,27,29,31,33
7600100032400000001
78250875025
7600100033000050001
78250875026
7600100033000020001
2-40,42-46,48
7600100033000030001
7600100033000040001
7600100036700000001
78250875027
1,1 ,2-5,6,6 ,7,8,9,9 ,10,10 ,11-19
7600100038100000001
78250875028
1,1 ,18,19,2,2 ,3,3 ,4,4 ,5,5 ,6,6 
7600100038600000001
78250875000
6¡,7 ,7¡,8,8 ,9-15,16,17,20-22
7600100038600000002
25 ,26-49
7600100038600000003
7600100038700000001
78250875029
7600100040100000001
78250875030
1-4,6,8,10,12,14,16,18
7600100040900000001
78250875031
1-5,6,6 ,7-16,18,19,20,22,24
7600100047600000001
78250875032
1-5,6,6 ,7,7 ,8-13,14,14 ,15-25
7600100051000000001
78250875033
1,2,2 ,3,4,4 ,5,5 ,6-12,13,14,14 ,15
7600100053000000001
78250875034
7600100053000000002
1-15,16 ,16
7600100055100000001
78250875035
7600100055100000002
7600100056600000001
78250875036
14-47,49
7600100056600000002
1-21,23,25,27
7600100058600000001
78250875038
1,1 ,2,3,3 ,4,4 ,5,5 ,6-13,15-21
7600100058900000001
78250875039
1-20,21,22,23,24,25,26,28,30,32,34,36,38
7600100032900070001
150534
78250865000
1,2,3,4,5,7,9,11,13
7600100032900040001
1-7,9-16
7600100032900010001
1-14,16,18,20
7600100032900020001
7600100032900090001
2,4,8,10
7600100032900100001
7600100032900080001
7600100032900110001
7600100032900050001
1,2,1 ,1¡,3,4,5,7-15,17,19,21,23
7600100032900060001
1,2,4,4 ,5,6-19
7600100002100012000
78250865002
1-10,12-20,22,24,25,25 ,26,27,28,29
7600100002100020001
7600100002100030001
7600100046500000001
78250865037
7600100009300000001
150537
78250865007
1,2,4,6,8,10
7600100021300000001
78250865021
1,2,3,3 ,4-11
7600100005200000001
78250865005
1-15,17
7600100003300000001
78250865004
1,2,3,5,7,9
7600100057400000001
78250865040
1-28,30,32,34,36
7600100017700000001
78250865016
7600100024200000001
78250865022
7600100037200000001
78250865030
7600100020100000001
78250865020
7600100043600000001
78250865033
8,9-37
7600100043600000002
1-11,13,15,17,19,21,23,25
7600100014400000001
78250865012
7600100043900000001
78250865034
7600100015000000001
78250865013
7600100018600000001
78250865018
7600100012600000001
78250865011
7600100027500000001
78250865023
1-7,9,11,13,15,17,19
7600100029300000001
78250865025
7600100016500000001
78250865015
1-15,17,19,21,23,25,27,29,31
7600100036600000001
78250865028
1-6,8-16,19
7600100002400000001
150533
78250865003
7600100019200000001
78250865019
7600100032300000001
78250865026
1-8,10,12,14,16,18,20,22,24
7600100018100000001
78250865017
1-14,16,18,20,22,24,26,28
7600100057600000001
78250865041
7600100047200000001
78250865038
7600100045600000001
78250865035
7600100009600000001
78250865008
7600100013500000001
78250865010
7600100040700000001
78250865031
7600100008900000001
78250865006
1-14,16,18,20,22,24,26,28,30
7600100043100000001
78250865032
1 ,1,2 ,2,3-9,10 ,10,11-14,15 ,15,16-41
7600100052100100001
78250895000
43,45,47
7600100052100100002
1 ,1,2 ,2,3-5,6 ,6,7-46
7600100052100090001
1-4,5 ,5,6-8,9 ,9,10-31
7600100052100040001
1 ,1,2,3,4 ,4¡,4£,4,5 ,5¡,5,6-8,9 ,9,10
7600100052100050001
11,14,16,18
7600100052100050002
1,2 ,2,3-7,8 ,8,9,10 ,10,11-43
7600100052100060001
7600100052100120001
1-12,14-16,18
7600100052100070001
1-7,9,11,13
7600100052100110001
1-21,22,24,26,28,30,32,34,36,38,40,42
7600100022600000001
44 ,44,46,48,50,52,54
7600100022600000002
1-26,27 ,27,28,29,30,31,32,34,36,38,40
7600100008400000001
7600100008400000002
1-30,32,34,36,38
7600100004600000001
150564
7600100006500010001
1-43,44,46,48 ,48,50,52,54,56,58,60,62
7600100006500020001
7600100006500020002
1-26,28,30,32,34,36,38,40,42,44,46,48
7600100008600000001
1,6,8,4
7600100012400010001
1-3,5-8,9-32
7600100012400020001
1-5,7
7600100013100000001
1-23,25,27,29,31,33,35,37,39
7600100018800000001
78250850010
1-12,13 ,13,14-47,48 ,48,49 ,49,50-100
7600100024500000001
7600100029700000001
1-49,51,53,55,57,59,61,63
7600100063700000001
1-11,13,15,17,19
7600100035900000001
1-14,16-36,38,40,42,44,46,48,50,52,54
7600100036400000001
56,58,60
7600100036400000002
1,2,3,3 ,4-21,25
7600100041100010001
78250895017
7600100041100020001
1,2 ,2,3-23,24 ,24,25-40,41 ,41,42-55
7600100048200010001
78250895018
1-42,47
7600100048200020001
2,3 ,3,4-8
7600100048200030001
7600100048300000001
78250895019
7600100065700000001
1,2 ,2,3,4,5
7600100050500000001
1-11,12 ,12,13-21
7600100052300000001
1-34,36,38,42,44,46,56
7600100055800000001
1-35,37,39,41,43,45,47
7600100058300000001
7600100059400000001
1-19,22,24,26,28
7600100000200000001
78250850001
2,3 ,3,4-14,15 ,15,16,18-22,23 ,23,24-40
7600100000500000001
78250885002
42-59,61
7600100000500000002
1-8,11,13,15,17,19,20,22
7600100001500000001
78250850004
1-5,7 ,7,8-17,18 ,19 ,20 ,20,21,22,22 
7600100003400010001
78250850005
7600100003400010002
7600100003400020001
1,1 ,5 ,5,7 ,7,9 ,9,11,13,15 ,15,17,19
7600100003400030001
1-17,19,21,23,25,29,31
7600100007600000001
150510
78250850006
1-25,27-29,31,33,35,37
7600100009100000001
78250850007
1,3-6,8-11,13,14,16-18,21,23-43,45
7600100015600000001
78250850008
47-54,56
7600100015600000002
1-13,14-31,33,35,37,38
7600100015900010001
78250850009
1,3 ,3,5,7,9,11,15,17,19,21,23
7600100015900020001
2,4,8,10,12,14,16
7600100015900030001
2-8,10,12,14,16,18,20,22,24 ,24,25,26 
7600100020500000001
78250850011
7600100020500000002
1-6,8,10,12,14,16,18
7600100026500000001
78250850013
1-2,3 ,3,4 ,4,5-7,8 ,8,9,12,13 ,13,14
7600100028500000001
78250850014
16,17,19,20,20 ,21-36,37 ,37,38,39
7600100028500000002
2,4,6,9-13
7600100028400010001
78250850015
1,3-27,29
7600100029800000001
78250850016
1 ,1,2 ,2,3-30,32,33 ,33,34-88,90-92
7600100032500000001
78250850000
1 ,1,2,3 ,3,4 ,4,5 ,5,6-8,9 ,9,10,11 ,11
7600100033100000001
78250850017
12-29,31,33,35
7600100033100000002
2,4,6,8,10,12,14,16,18,20,22
7600100033100010001
1-13,15,17,19,21,23,25,27
7600100033400000001
78250850018
4,6,8,9-12,14,16,18-21
7600100035300020001
78250865027
1-9,10 ,10,11 ,11,12-15,16 ,16,17-30
7600100035300010001
150536
7600100035300010002
5-10,12-22,25-38,40-42,44-48,50,52,54
7600100035800000001
78250850020
1-10,11 ,11,12-17,19,21
7600100038000000001
78250850022
2 ,3-12,14
7600100039900000002
1-6,8-17
7600100042600000001
78250850024
1-3,5-14,16-29,30 ,30,31-42,44
7600100044100000001
78250850025
1-7,9,11,13,15,17,19,21,23,25
7600100044300000001
78250850026
1-9,10 ,10,11-16,18,20,22,24
7600100045400000001
78250850027
1-20,23-29,31-40,43-46,47 ,47,48,51-53
7600100047000000001
78250850029
55-59,61-65,67-72
7600100047000000002
1-18,19 ,19,20,22 ,22,24
7600100047500000001
78250850030
1-5,6 ,6,7,8,9 ,9,10,11 ,11,12,13 ,13,14
7600100048600000001
78250850031
15 ,15,16 ,16,17,18-19,20 ,20,21-25,26 
7600100048600000002
7600100048600000003
1,2,4-8,10,12
7600100049300000001
78250850032
1-5,7 ,7,9,11,13,15,17,19,21,23
7600100050300010001
78250850033
1,2 ,2,3-7,9,11,13,15,17,19,21,23 ,23,25
7600100050300020001
27,29 ,29,31,33,35,37
7600100050300020002
1,3,5,7,9,11 ,11,13,15,17
7600100050300030001
1,2,2 ,3,4 ,4,5,6 ,6,7-13,17,19 ,19,21
7600100050300040001
23 ,23,25 ,25
7600100050300040002
2,3,4 ,4,5,6
7600100050300050001
1-11,13-16,23,25
7600100050300060001
1-21,23,25,27,29,31
7600100051500000001
78250850034
1,3,5,7,8,9,10,12,16,18
7600100052800000001
78250850036
1-5,7,9-12,14-17
7600100054000000001
78250850037
2-19,20 ,20,22,24,26,28,30,32,34,36
7600100057500000001
78250850038
2,5,6,8,10,14,22
7600100058800000001
78250850039
7600100027600000001
150539
78250555000
1-6,7 ,7,8-11,12 ,12,13,15
7600100024600130001
150522
78250553000
1,2 ,2,3-20,22-32,34,35,36 ,36,37,39,40
7600100024600140001
1 ,1,2,4,5,6-14,16,18,20,22,24,26
7600100024600160001
1,3,5,7,9,11,13
7600100024600350001
1-10,12,13,14
7600100024600430001
1-7,8 ,8,9-13
7600100024600270001
1 ,1,2-26
7600100024600450001
7600100024600210001
1 ,1,2 ,2¡,2,3-15,17
7600100024600380001
1 ,1,2-7,8 ,8,9-11,12 ,12¡,12,13¡,13,14
7600100024600040001
7600100024600040002
1-17,19,21
7600100024600100001
1¡,1¢,1,2,3-16
7600100024600170001
1 ,2-20
7600100024600230001
1 ,1,2-16,18
7600100024600090001
1 ,1,2-16
7600100024600440001
1 ,1,2 ,2,3-18
7600100024600110001
7600100024600080001
7600100024600390001
1-7,9-25,27-56,57 ,57,58-64,66,68
7600100024600490001
1-3,5,7-23,25-44,45 ,45,46 ,46,47-64
7600100024600120001
1 ,1,2-9,11-22,25-29,31-39,41-43,44 ,44
7600100024600060001
45 ,45,46 ,46,47-50,51 ,51,52-61,63-66
7600100024600060002
3,4,6,7,9,10,11 ,11¡,11,12,15-18,20,21 
7600100024600480001
21,23-45,47,48,49 ,49,50,52-55,56 ,56
7600100024600480002
57-65
7600100024600480003
7600100024600050001
1-11,13-16
7600100024600500001
7600100024600030001
1 ,1,2-9,11,12,13 ,13,14 ,14,15-38
7600100024600460001
1-14,15 ,15¡,15,16-39
7600100024600330001
7600100024600070001
1-4,5 ,5,6-14,15 ,15,16,17 ,17,18-24,25 
7600100024600180001
25¡,25,26-29,30 ,30,31-34,35 ,35,36-48
7600100024600180002
49 ,49,50,52-64,66
7600100024600180003
7600100024600310001
7600100024600300001
1 ,2,4-8
7600100024600220001
4-7,8 ,8,9,10 ,10,11,15,17,18,20,22,24
7600100024600400001
26,28,29 ,29,33,34,35,37,39
7600100024600400002
1 ,1¡,1¢,1,2,3,4,5,7,8,9
7600100024600200001
1 ,1,2 ,2¡,4,6,8,9,10,12-16,18,19 ,19
7600100024600290001
20,21,22,24 ,24,25-34,36,38,40,42,44,46
7600100024600290002
48,50,52,54,56,58,60,62,64,66,68,70,72 
7600100024600290003
72¡,74,76,78,78 ,78¡,80,82 ,82,84,86,88
7600100024600290004
90,92,94,96,98 ,98
7600100024600290005
1,3,4,6,8,14,16
7600100024600240001
150524
2,6,7,8,9 ,9,11,14
7600100024600470001
7600100024600150001
1-31,32 ,32,33-55,56 ,63,65-67,69-74,76
7601000000100410001
152260
7621
78226551000
80-83,84¢,84,85-112,113 ,113,114-132
7601000000100410002
1 ,1¡,1,2 ,2¡,2,3 ,18 ,19 ,20 ,22 ,26 
7601000000100110001
26¡,30 ,4-17,18,19,20,21,22,23-25,26
7601000000100110002
27-29,30,31,32,33,34-48
7601000000100110003
7601000000100220001
1-8,10-16
7601000000100460001
1 ,2-15
7601000000100290001
1,2 ,2¡,2,3-16,18,20-44,46,48,50
7601000000100400001
1 ,1¡,1£,1,2 ,2¡,2¢,2¤,3-29
7601000000100500001
78226000000
7601000000100510001
7601000000100060001
1 ,1,2,3 ,3,4,5 ,5,6-9
7601000000100320001
1,2 ,2¡,2¢,2£,2,3-12,13 ,13,14-16,17 ,17
7601000000100340001
47,48-52
7601000000100340002
1 ,3,8,9
7601000000100010001
1 ,1¡,1,2-6,7 ,7,8-16,18,19
7601000000100090001
1,3-7,8 ,8,9-14,16,18,20,21,23,25
7601000000100480001
1-21,27-43,46
7601000000100230001
1-6,8-11
7601000000100240001
7601000000100280001
1-29,30 ,30,31-33,34 ,34,35-57
7601000000100260001
4-19,20 ,20,21-25,26¡,26¢,26,27,28¡,28
7601000000100120001
1-3,6¢,8,9,11,15-23,25
7601000000100420001
1 ,1¡,1,2-16,18
7601000000100390001
1-3,5-7,9,11-24,26,28,30 ,30,32,36,38,40
7601000000100360001
7601000000100370001
1,2,4,6-10,13
7601000000100300001
1-10,12,14,18-22
7601000000100450001
1-10,12,14,16,18,20,22-30
7601000000100430001
1 ,1,2-18
7601000000100080001
1-5,6 ,6,7-11,12 ,12,13-21
7601000000100440001
7601000000100160001
1 ,1,2 ,2,3 ,3,4 ,4,6-18
7601000000100330001
7601000000100470001
7601000000100200001
7601000000100570001
5,7,8,9 ,13
7601000000100560001
2,4,10,11,13,15,16,17
7601000000100210001
1,2,3,5,7 ,8,9,11 ,11
7601000000100380001
3-6,7 ,7,8,10,12-15,17
7601000000100020001
5,8
7601000000100030001
7601000000100150001
1,2 ,2,3-14,15 ,15,16-26,28-44,50,52
7601000000100250001
2,3,6-12
7601000000100040001
1,3,5 ,5,7,9,11 ,11,13,15
7601000000100180001
1,2,3,5,6,8,9,10
7601000000100140001
1-7,8 ,8,9-12
7601000000100130001
1,1 ,2 ,2,3-6,8 
7601000000100350001
7601000000100490001
1,3,5,6,7
7601000000100190001
1-10,11 ,11,12-45,46 ,46
7601000000700000001
78226840002
7601000001000000001
78226840003
7601000002100000001
78226840005
1-23,24 ,24,25-68
7601000001900000001
78226840004
7601000003900000001
78226840006
1-88
7601000005300000001
78226840007
1-35,36,38
7601000007200000001
78226840009
1-22,23
7601000007700000001
78226840011
7601000008900000001
78226840013
7601000010700000001
152295
78226811009
1-30,31 ,31,32-35,36 ,36,37 ,37,38-55
7601000012000000001
78226840017
7601000014300000001
78226840020
7601000015900000001
152264
78226840022
7601000019400000001
78226840024
1 ,1,2,3 ,3,4 ,4,5-14,15 ,15,16-24,25 
7601000020500000001
78226840026
1-35,37,38
7601000027800000001
78226840030
1-4,5 ,5,6 ,6,7-20,21 ,21,22-29,30 ,30
7601000029200000001
78226840032
7601000006000000001
78226840008
7601000007600000001
78226840010
7601000008100000001
152285
78226840012
1-9,10 ,10,11-43
7601000009700000001
78226840014
7601000011900000001
78226840016
7601000014000000001
78226840019
1-18,19 ,19,20,21
7601000014600010001
78226840021
1-5,6 ,6,12 ,12,13-29,30 ,30,31-51,58
7601000014600020001
1-20,21 ,21,22-35
7601000014600030001
1 ,1,2-7,8 ,8,9-12
7601000014600040001
1-15,18¡,18,19 ,19,20-22,23¡,23,24,25 
7601000018100000001
78226840023
7601000021600000001
78226840027
1,2 ,2¡,2,3,4,5 ,16 ,16,17,18,19 ,19
7601000026700000001
78226840029
7601000028900000001
78226840031
1,2 ,2¡,2,3-22
7601000029300000001
78226840033
7601000029400000001
78226840034
7601000020300000001
78226840025
5500000100001140001
5500000100001140002
(2-16),5
3400000100030670001
16,17,18,22,23
3400000100030670002
(34-50),77 ,(81-103)
5700100100000160001
(2-32),(1-75),79
5700100100000160002
(52-134),(55-137)
5700100100000200001
302011
(2-50),(1-53)
5700100100000200002
302031
6,7,9
5700100100000300001
302006
5700100100000300002
302030
(13-33),(26-36)
5700100100000320001
5700100100000320002
(2-26),(1-19),(23-29)
5700100100000530001
5,21,(30-40),(31-39)
5700100100000530002
302038
(6-84),(9-79)
5700100100006980001
302001
84 ,(86-156),(81-165)
5700100100006980002
17,19,21,24,10 
5700100100000630001
(6-22),(7-15)
5700100100000630002
(34-88),(35-75)
5700100100000680001
5700100100000680002
(2-92),(1-53)
5700100100000700001
94-108,71,73,85,87,89,91
5700100100000700002
302026
5700100100006500001
41-68
5700100100006500002
69-116
5700100100006500003
5700100100000860001
(46-102),(49-103)
5700100100000860002
302016
(2-92),(1-105),94
5700100100000930001
94 ,(96-114),(107-119),123
5700100100000930002
5700100100001010001
5700100100001010002
58-96
5700100100001100001
8-50
5700100100001100002
5700100100001100003
(78-96),(97-137)
5700100100006510001
(2-46),60,(1-67)
5700100100006510002
(50-58),(69-95),(62-76)
5700100100006510003
2-51,53,55,57,59
5700100100001120001
(52-106),(61-105)
5700100100001120002
5700100100007050001
(40-76),(31-69)
5700100100007050002
78
5700100100007050003
(12-58),2,(11-41)
5700100100007090001
(62-140),(43-97)
5700100100007090002
(99-107)
5700100100007090003
5700100100001360001
14-91
5700100100001360002
5700100100001400001
(10-88),(1-81),85
5700100100001400002
(18-64),(15-53)
5700100100007120001
(300-406),(257-261),279,291,287
5700100100007120002
(120-206),(127-231)
5700100100007120003
(66-106),(63-117)
5700100100007120004
(234-288),(235-255)
5700100100007120005
5700100100001630001
5700100100001630002
1-5,7-999,6
5700100100001710001
6¡
5700100100001710002
(4-200),(1-207)
5700100100001850001
(202-260),211,213
5700100100001850002
5-98
5700100100001860001
5700100100001860002
5700100100001880001
5700100100001880002
1-19,20,21,23
5700100100001830001
20 ,22,24-36
5700100100001830002
(92-98),(91-103)
5700100100006860001
5700100100006860002
105,107
5700100100006860003
65-175
5700100100001970001
302040
5753
54401369000
21-29,43,45 ,51,57
5700100100001970002
63 
5700100100001970003
302028
(24-36),19,19 ,31
5700100100002030001
5700100100002030002
5700100100002030003
302020
19-75,141
5700100100002090001
5700100100002090002
6-106,108
5700100100002230001
107
5700100100002230002
1-56,57,59,60,61
5700100100007210001
(108-136),143-191
5700100100007210002
(58-106),(63-141)
5700100100007210003
1-37,39-41,43
5700100100000890001
38,42,44-174
5700100100000890002
(12-18),(7-31)
5700100100002280001
5700100100002280002
(8-28),3,5,11
5700100100002340001
(13-17),46-66
5700100100002340002
5700100100002330001
5700100100002330002
1-16,(18-32)
5700100100002290001
5700100100002290002
(28-60),(27-67)
5700100100002400001
5700100100002400002
1-15,(16-36)
5700100100007550001
(17-23),38-54,86
5700100100007550002
5700100100002380001
82-100
5700100100002380002
5700100100002520001
31-109
5700100100002520002
2/8,10/12,1,3
5700100100002580001
(14-78),(5-69),105
5700100100002580002
(80-128),(155-177)
5700100100002580003
1,5-100
5700100100002540001
302009
5700100100002540002
302008
(2-64),(45-81)
5700100100002560001
5700100100002560002
5700100100007560003
6,8,10,32,34,38,(1-11),12
5700100100006570001
(40-166),(13-179)
5700100100006570002
79,205-213,217
5700100100002900001
302027
5700100100002900002
122-168,(44-68),(49-59)
5700100100002900003
4-57,(59-69)
5700100100003110001
(58-64),70-97
5700100100003110002
5700100100003230001
53-69
5700100100003230002
302042
(78-158),(83-165)
5700100100006590001
1-77,79,81
5700100100006590002
64-95
5700100100003320001
5700100100003320002
(22-28),(21-41),30,38,69,71,77
5700100100003330001
(2-20),19,43-55
5700100100003330002
26-76
5700100100006800001
8,14-18,19-21
5700100100006800002
(77-101),102-148
5700100100003640001
1-75,(76-100)
5700100100003640002
1-69,(70-108)
5700100100006920001
(71-89),110-134
5700100100006920002
1-62,63,64,65,66
5700100100006930001
(116-142),(93-135)
5700100100006930002
(68-114),(65-91),63
5700100100006930003
(77-89),90-214
5700100100007580001
1-75,76,(78-88)
5700100100007580002
5700100100003780001
302023
5700100100003780002
26-122
5700100100003780003
5700100100003830001
5700100100003830002
5700100100007570001
5700100100007570002
1-48,50,51,52,54-999
5700100100003970001
49,53
5700100100003970002
1,3,5,9
5700100100004070001
11,18
5700100100004070002
111,113-150
5700100100004170001
5700100100004170002
2,4,6 ,(1-19)
5700100100004250001
(8-38),(23-39),43,54,52,53
5700100100004250002
(76-106),(75-105),107-999
5700100100004300001
5700100100004300002
2,4-22
5700100100006620001
1/1,3
5700100100006620002
(65-97),102-130
5700100100006630001
(4-72),(1-43)
5700100100006630002
(45-63),(74-100)
5700100100006630003
(38-104),(43-103),12,31,113
5700100100005540001
1-10,11,13-25
5700100100005540002
5700100100005060001
5700100100005060002
5700100100005120001
5700100100005120002
86,88
5700100100005180001
1-84,85,89-999
5700100100005180002
1-71,73,74,75
5700100100005260001
72,76-999
5700100100005260002
1-37,39,41
5700100100005300001
5700100100005300002
1-64,(65-105)
5700100100005360001
(66-110),111-163,107,109
5700100100005360002
(21-33),(40-46)
5700100100005420001
1-19,(20-38)
5700100100005420002
(2-68),(5-77)
5700100100005470001
70 ,(72-96),(79-97)
5700100100005470002
1800000100003220003
3-7,8-12
6900000400001010001
6900000400001080001
6900000400001230001
2,3,3 ,5,6
6900000400001150001
2,3,3 ,4,6,7,8,8/23,11
6900000400001320001
6900000400001270001
1/10,3,5,7/15,9/18,10,11,13,15,17,19,23
6900000400000500001
47,49,51,17/1,36,19,21,21 ,23,24,25,26
6900000400001010002
30,32,34,44,46,48,50
6900000400001010003
7,17,11,15,19,21,21 ,23
6900000400001150002
59,61,61 
6900000400001300001
1-10,16
6900000400001410001
2-8,1 
6900000400001390001
4800000100004290003
(130-134),138
1600000200000180011
30/3,30/4
1600000200000150006
4,8,12,16,18,22
1600000200000510004
423820
2500000200000370001
17-45
2500000200000370002
(26-168),(31-93)
2300000100005840002
(10-32)
2300000100002460003
(2-132),(1-121)
2300000101300140001
350915
03401964001
(134-416),(123-379)
2300000101300140002
350916
2300000101300230001
(160-402),(155-419)
2300000101300230002
(2-156),(1-173)
2300000101300350001
(158-390),(175-461)
2300000101300350002
(2-148),(1-155)
2300000101300360001
(150-392),(157-391)
2300000101300360002
(2-132),(1-209)
2300000101300400001
(134-292),(211-307)
2300000101300400002
(2-200),(1-169)
2300000101300440001
(202-500),(171-417)
2300000101300440002
(2-108)
2300000101300470001
2300000101300470002
(2-164),(1-137)
2300000101300480001
(166-416),(139-373)
2300000101300480002
6100900000100420001
347350
6107
60212832001
6100900000100420002
2,4,6,8,10
6100900000100520001
199
5900001100000960004
(78-80)
5902800100000090003
3600000100008610004
3800001100000040001
3800001100000040002
3800001100000670001
3800001100000670002
3800001100001050001
3800001100001050002
3800001100001920001
3800001100001920002
8-13
3800001100000160004
3701500004000010001
155230
24223840016
40,43,47,49,53,55,56,60
6300000200001560001
445359
6382
6345
36404000000
12-33
8600000400000150001
628684
8605
71133000000
8600000400000150002
628680
8600000400000210001
24-30
8600000400000210002
628681
8600000400000220001
8600000400000220002
5900000100016400003
614027
5900000100016400004
614028
(11-41)
5900000100016400005
614029
(18-46)
5900000100016400006
149,151,157¡
5200000100003830004
107,113
5200000100004440004
(161-165),(184-186),220,222,226¡
5200000100002550008
266-272,279-290
5200000100002550009
41,45-49
5200000100006660003
(38-42),39 ,41,(52-58)
5200000100007990007
(55-63),(56-98),(69-75),(93-103)
5200000100001080003
107,109,111
5200000100001080004
193,193/1,193/3,195,200-203,199,189
5200000100009460003
30 
5200000100000220001
1-30,31-999
5200000100000220002
1-6,7 ,7,8-27,28 ,28,29-74
7601000012900000001
152262
78226850007
7601000018900000001
78226850001
7601000011000000001
78226850006
7601000006500000001
78226850005
7601000005200000001
78226850003
7601000003100000001
7601000024500000001
78226850009
7601000020700000001
78226850008
7601000005900000001
78226850004
1 ,2-29,30 ,30,31-48,49 ,49,50-61
7601000028500050001
152265
78226885001
1-9,10 ,10,11-22,23 ,23,24-37
7601000028500040001
1,2¡,2,3,4 ,4,5,6,7 ,7,8 ,8,9-11,12¡,12
7601000028500030001
7601000028500020001
1,1¡,2-15,16 ,16,17-31
7601000028500060001
7601000028500070001
1-23,24 ,24,25-37,38 ,38,39-55,56¡,56
7601000017700020001
78226885002
1,2 ,2,3-8,9 ,9,10-22
7601000017700010001
1-23,27,28
7601000017700030001
7601000017700040001
1-24,25 ,25,26-45,46¤,46,47-75,76 ,76
7601000026900020001
78226885003
1-32,33 ,33,34-37
7601000026900010001
1 ,1¡,1,2-17
7601000013000040001
78226855001
1 ,1,2,2 ,2¡,3-9,10 ,10,11 ,11¡,11¢,12 
7601000013000010001
12¡,11,12,13-48,49 ,49,50-97
7601000013000010002
7601000013000030001
7-38
7601000013000060001
7601000003400000001
78226855005
7601000006200000001
78226855007
7601000009900000001
78226855009
7601000031400000001
78226855011
7601000016800000001
78226855013
7601000020800000001
78226855016
7601000021200000001
78226855018
1,2 ,2,3-20,21 ,21,22-29,30 ,30,31-33
7601000023900000001
78226855020
1 ,1,2-34
7601000029000000001
78226855025
1 ,1,2-42
7601000000300000001
78226855002
7601000002000000001
78226855004
7601000003500000001
78226855006
1-11,12 ,12,13-29
7601000007500000001
78226855008
7601000012600000001
78226855010
7601000013900000001
78226855012
7601000018500000001
78226855014
7601000020900000001
78226855017
7601000021700000001
78226855019
7601000024900000001
152271
78226825023
7601000028400000001
78226855024
7601000030300000001
78226855027
7601000002900180001
152290
78226554000
7601000002900390001
1,2 ,2,3-6,7 ,7,8-22,24-33
7601000002900450001
1-7,9,11,13,15,19
7601000002900160001
7601000002900300001
1,3,5-20,21,22
7601000002900220001
1,2 ,2,3-13
7601000002900230001
1-22,24,26,28,30,32
7601000002900460001
1-18,20,22,24,26,28,30,32
7601000002900080001
7601000002900090001
1-6,13,15,17
7601000002900400001
152291
2,4,8,10,12
7601000002900410001
1-6,8,10,12,14
7601000002900360001
7601000002900340001
1,2 ,2¡,2,3-8,9 ,9,11,13,15,17,19
7601000002900470001
1 ,1,2-10
7601000002900480001
1,2 ,2¡,2,3-8,10,12
7601000002900490001
7601000002900240001
7601000002900280001
2 ,2,4,6,8,10,12
7601000002900370001
1,3,5,7,9,11,13,15,17,19,21 ,21,23,25,27
7601000002900190001
39,41,43,45,47,49,51,53,55,57,59,61,63
7601000002900190002
65,67,69,71,73
7601000002900190003
1 ,1,2-6,8,9-13,15
7601000002900200001
1-5,7,9,11,13,15,17,19,21,23
7601000002900130001
1,2,3 ,3¢,3,4,5 ,5,7,8,9,11,12,13,15,16
7601000002900070001
17,18 ,18,20,21,22 ,22,23-28,30,32,34,36
7601000002900070002
7601000002900070003
1,1 ,1¡,1¢,2 ,2,3,4,5-10,11 ,11,12-24
7601000002900170001
25 ,25,26,27,28,29 ,29,30 ,30,31,32,33 
7601000002900170002
33,34-40,41 ,41,42,43 ,43,44-53
7601000002900170003
55,57,59,61,63,65,67,69,71,73 ,73
7601000002900170004
75,77,79,81,83,85
7601000002900170005
1¡,1,2 ,2,3,4,5,6 ,6,7-37,38 ,38
7601000002900140001
39-52,54 ,54,56 ,56,58,60,62,64,66
7601000002900140002
1-9,11,13,17
7601000002900150001
1,3 ,3,5,6 ,6,7,8,10,12,13 ,13,14,15,16
7600100021100150001
150525
78250860000
17 ,17,18 ,18,19 ,19,20 ,20,21,22,23 ,23
7600100021100150002
24 ,24,25 ,25,26 ,26,27 ,27,28,29,30 ,30
7600100021100150003
31,32,33
7600100021100150004
1,2,3 ,3,4,5,6,7¢,7,8,9 ,9,10-13,14 ,14
7600100021100020001
14¡,15,16,17,18,19 ,19,20,21,22 ,22,23 
7600100021100020002
23,24 ,24,25,26,27 ,27,28 ,28¡,28¢,28,29
7600100021100020003
30-38,39 ,39,40-48,49 ,49,50-54,56
7600100021100020004
1¦,1,2 ,2,3-11,12 ,12¦,12,13-15,16 ,16
7600100021100090001
17,18 ,18,19 ,19,20¦,20,21 ,21,22-35
7600100021100090002
36 ,36
7600100021100090003
1-40,41 ,41,42,43,43 ,44,45,46 ,46,47-52
7600100021100100001
1,2,3 ,3,4-9,10 ,10,11-28,29 ,29,30 ,30
7600100021100060001
31-36,37¡,37,38,39 ,39,40,41,42,46,48,49
7600100021100060003
1-3,4 ,4,5,6 ,6,7-15,16 ,16,17,18 ,18,19
7600100021100070001
19 ,20,21-27,28 ,28,29,30 ,30,31 ,31,32
7600100021100070002
33,35-39,40 ,40¡,41,42,43 ,43,44 ,44¡,44
7600100021100070003
45,46,47 ,47,48 ,48,49 ,49,50 ,50,51,52 
7600100021100070004
52,53,54,55,56 ,56,57,58,59
7600100021100070005
1-9,11-24,25 ,25,26-28,29 ,29,30,31,32
7600100021100040001
32 ,33,34 ,34¡,34,35-38,40,42,43-47,48 
7600100021100040002
48,49 ,49,50-53,54 ,54,55-60,61 ,61,62
7600100021100040003
7600100001700000001
78250845002
7600100002700000001
150530
78250860004
7600100002600000001
78250860003
1-18,20,22,23,24,25
7600100005900000001
78250860005
7600100008800000001
78250860006
7600100015400000001
150509
78250860007
7600100021200000001
78250860009
7600100023900000001
78250860010
1,2-8,16-30
7600100026300000001
78250860011
7600100030500000001
78250860012
7600100031300000001
78250860019
7600100037700000001
78250840000
7600100039600000001
78250860014
7600100039800000001
78250860015
7600100048100000001
78250860017
7600100057800000001
78250860018
7601000003000030001
78226811001
7601000003000050001
7601000003000040001
2-9,10 ,10,11-87
7601000003000020001
7601000003000010001
7601000003000060001
1-9,10 ,10,11-23,24 ,24,25-34,35 ,35
7601000017800040001
78226811018
1-5,6 ,6,7-12
7601000017800010001
7601000017800020001
1 ,1,2 ,2,3 ,3,4,5 ,5,6-22,23 ,23,24-41
7601000018600000001
78226811019
1-3,4 ,4,5-43
7601000017100000001
78226811017
7601000010400000001
78226811010
7601000031200000001
78226811023
7601000029800000001
78226811028
7601000007000000001
78226811005
7601000006300000001
78226811004
7601000025500000001
78226811024
7601000010100000001
78226811008
7601000015300000001
78226811014
7601000019500000001
78226811020
7601000010900000001
78226811011
7601000019700000001
78226811021
7601000023000000001
78226811022
7601000015600000001
78226811015
7601000008800000001
78226811007
7601000011500000001
78226811013
7601000008500000001
78226811006
7601000011300000001
78226811012
7601000026400000001
78226811025
7601000027400000001
78226811026
7601000001700000001
78226557000
7601000016900000001
78226811016
7601000030400000001
78226811029
1-7,9-16,18
7601000004700000001
152275
78226802005
7601000022300030001
152288
78226816001
7601000022300010001
7601000022300020001
7601000022300040001
1-44,46,48,50,52
7601000018000000001
78226816010
1-57,59,60
7601000012300000001
78226816006
7601000017600000001
78226816009
7601000013500000001
78226816007
7601000031900000001
78226816004
7601000005800000001
78226816003
7601000008600000001
78226816005
7601000030100000001
78226816014
7601000022700000001
78226816012
7601000032000000001
78226816008
1,2,3 ,3,4-17
7601000027000000001
78226816013
1-13,14 ,14,15-35,37-63,65,67,69,71,73
7601000017200010001
152284
78226860001
75,77,79,81,83,85,87,89,91,93
7601000017200010002
2-4,6-15,17-24,26,28,30,32,34,36,38,40
7601000017200040001
7601000017200040002
68,70,72,74,76,78
7601000017200040003
7601000017200080001
1,2,3,4,5,6,7,8/1,14/2,15,16,17,18
7601000017200050001
2,4-13,15,17,18,20,24,26,28,30
7601000017200020001
2/12,3,4,6,8,10
7601000017200030001
7601000017200060001
7601000017200070001
1/13,3-9
7601000017200090001
1-21,23-105,107,109,111,113,115,117
7601000000900000001
78226860002
1-8,10,12
7601000023400000001
78226860013
1-36,38,40,42
7601000019300000001
78226860011
7601000019600000001
78226860012
1-59,61,63,65,67,69,71,73
7601000028300000001
78226860016
7601000013400000001
78226860009
7601000013600000001
78226860010
1-23,25,27,29 ,29,31,33
7601000012200000001
78226860007
7601000032200000001
152286
78226820008
7601000013100000001
78226820018
1-10,12,14,15,17,19
7601000025400000001
78226860015
1-19,21,22
7601000005100000001
78226860003
7601000010000000001
78226860006
7601000024100000001
78226860014
1-9,11
7601000005000010001
152273
78226875001
1,3,5,9,11,13
7601000005000030001
1-11,13-26,28-31,33,35,37,39
7601000005000020001
1-7,9-31,33,37,39,41,43,45
7601000002700000001
78226875002
1-12,14,16,18,20,24,26
7601000022100000001
78226875008
2-34,36,38,40,42,44,46,48,50
7601000022200000001
78226875009
1-48,50,52
7601000022800000001
78226875010
1-22,24-30,32-36,38,40,42,44,46
7601000028800000001
78226875013
7601000018400000001
78226875007
7601000025300000001
78226875011
1-15,17,19,21,23,25,27,29,31,33
7601000017000000001
78226875006
7601000006600000001
78226875014
7601000015200000001
78226875005
7601000026300000001
78226875012
1 ,1,2,3,4,5
7601000031000010001
78226895009
7601000031000040001
1-5,6 ,6¡,6,7-10,11 ,11¡,11,12,13
7601000031000080001
1-9,11,13,15,17,19,21,23,25
7601000031000030001
1-10,11,13
7601000031000070001
1,3,5,7,9,11,13,15
7601000031000060001
7601000031000050001
7601000031000020001
1-7,9,11,13,15,17 ,17,19,21,23,25 ,25
7601000021800030001
78226895010
7601000021800020001
7601000021800020002
7601000021800010001
7601000030500010001
78226895001
1,2,3 ,3,4,5,6,8,10,12
7601000002200000001
78226895002
1-10,12,14,16,18
7601000002400000001
78226895003
7601000033300000001
78226895004
7601000007900000001
78226895005
7601000033500000001
1,2 ,2,3-43,45,47,49,51,53,55,57,59,61
7601000010500000001
78226895006
7601000010500000002
1 ,1¡,1,2-31,33,35,37,39,41,51,53,55
7601000033400000001
78226895007
1,2,3 ,3,4-24,25 ,25,26-49
7601000026000000001
78226895012
7601000023100000001
78226895011
1-17,19-31,33-37,39,41¡,41,43-98,100
7600100022800050001
78250830018
7600100022800030001
1-29,31,33,35 ,35¡,35¢,35,37,39,41,43
7600100022800040001
7600100022800070001
7600100022800080001
6-12,13 ,13,14¡,15,16
7600100030900000001
78250830022
2 ,2,4,5,7-19,21-27,29-31,33-37,39 ,39¡
7600100035700000001
78250830024
39,40,41 ,41¡,41,42,43¡,43,44 ,44,45-55
7600100035700000002
1,2 ,2,3-13,15-23,25-29,30 ,30,31-33
7600100003800000001
78250830005
34 ,34,35
7600100003800000002
1-7,8 ,8,9-25
7600100056800000001
78250830036
1-20,21 ,21,22-24,26,28,30
7600100039300000001
78250830027
1-4,6,8-13
7600100031700000001
78250830023
1-8,9 ,9,10-41,43,45,47-49
7600100042900000001
78250830030
1,2 ,2¡,2¢,2,4-8,9 ,9,10-22,24-34,35 ,35
7600100021900000001
78250830017
36-50,52,54,55,56,58,59,60
7600100021900000002
1-4,5 ,5,6-18,19 ,19,20-25,27,28,29-32
7600100019700180001
78250830000
35,36,37 ,37,38,39,40 ,40,41,42 ,42¡
7600100019700180002
43-52,53-59,61-67,69-79,81-87,89 ,89
7600100019700180003
91,93,95,97,99,101,103,105,107,109,111
7600100019700180004
113,115,117,119,121,123,125,127,129,131
7600100019700180005
1,2,2 ,2¡,3,4 ,4,5-7
7600100019700080001
1-8,9 ,9,10-12,13 ,13,14,15,17
7600100019700050001
1-7,8 ,8,9-11
7600100019700160001
1 ,1¡,1,2,3 ,3,4-7
7600100019700130001
7600100019700210001
1-4,5 ,5,6
7600100019700120001
1,2,4,5,6-9
7600100019700190001
1,3 ,4 ,4,5 ,5,6-8,11-15,17,18,19 ,19
7600100043800030001
78250830031
21-24,25 ,25,26
7600100043800030002
1-5,6 ,6,7 ,7,8-10
7600100043800020001
2-18,21,23
7600100043800040001
1 ,1¡,1,2 ,2,3,4,6-9,12-15,16 ,16¡,16
7600100043800050001
7600100043800090001
1-4,5 ,5,7-11
7600100043800010001
2-8,10
7600100043800100001
1 ,1¡,1¢,1,2-12,14
7600100043800110001
7600100043800080001
7600100043800120001
1,4-12,13 ,13,14-27
7600100043800070001
46,47
7600100037600010001
78250830028
7600100049000000001
78250830033
7600100002900000001
1-9,11,12,14-16,18,20-28,30-33,35-44
7600100055400000001
150545
78250830034
7600100010200000001
78250830013
7600100036300000001
78250830025
1-5,7-11,12 ,12,14-17,18 ,18,20,22
7600100006900000001
78250830009
7600100007300000001
78250830010
1-11,13,17
7600100009000000001
78250830012
7600100023200000001
78250830019
1-6,7 ,7,9,11
7600100066200000001
1-3,4 ,4,5-8
7600100066300000001
78250830037
1-20,21 ,21,23-26,28-32,34,36,38,40
7600100028100000001
78250830021
7600100042500000001
78250830029
1-13,15-27,29
7600100056200000001
78250830035
7600100062200000001
78250840025
7600100003100000001
78250830004
1-9,11,13,15,17,19,21,23
7600100002000000001
78250830002
7600100013300030001
78250830014
7600100013300100001
1-5,7,9,10-12,14,16,17,19,21,23
7600100013300040001
2,4-10,20,22
7600100013300120001
7600100013300080001
1 ,1,2 ,2¡,2,3-6,8-10,12,14,16,18,20
7600100013300060001
1/16,2,3,5,7,11,13/9
7600100013300110001
1,2/14,4,6,8,10,7/12
7600100013300070001
1,2 ,3,4,5,8,10,12,14,16
7600100013300050001
1 ,1,1/8,2-12,13 ,14,15,17-20
7600100013300090001
1 ,1,2,3
7600100013300010001
2 ,2,3,4-8,9 ,9,10-20
7600100013300020001
1 ,1,2 ,2,3-6,7 ,7,9
7600100001000020001
150526
78250885003
1,2 ,2¡,2,3 ,3,4-10,11 ,11,12-34,36,38
7600100001000030001
2-5,6,7,8,9-13,14,16,18,20,22,24,26,28
7600100002800000001
150521
78250885004
7600100005700000001
150514
78250885005
1,2,3,4-7,8,9,10,11,12
7600100008300000001
78250885006
1-5,7,9,10,11,12,13,16,18,20
7600100062400000001
78250885007
1,2-4,5,6-14,15,16-35,36 ,36,38,40,42
7600100009800000001
78250885008
7600100014500010001
78250885009
1-13,15,17,19,21
7600100014500020001
7600100014500030001
1,3,5-33,35
7600100014700000001
78250885010
2 ,2¡,2,3-8,10 ,10,11-25,26 ,26¡,26
7600100020300000001
78250885011
27-49,51-57
7600100020300000002
1,3,4,5 ,5,6,7,9-21,22,23-25,26,27-36
7600100023300000001
78250885012
37,38-41,43,45
7600100023300000002
1-5,7-12,14-19,25,27,33,35,37,39,43
7600100028200000001
78250885013
7600100028200000002
1 ,1¡,1£,1¤,1¦,1,2 ,2¡,2¢,2,3-19
7600100033800010001
78250885001
1¢,1,3 ,3,4-9
7600100033800020001
2 ,2¡,2,3-7
7600100033800030001
1 ,1,2 ,2,3 ,3,4-34,36
7600100033800040001
1 ,1,2-14
7600100033800050001
7600100033800060001
1 ,1,2 ,2,3-10,11 ,11,12-17,18,19,20 ,20
7600100033800070001
7600100038300000001
78250885016
1,2 ,2,3-29,31,33,35
7600100040600000001
78250885017
7600100041600000001
78250885018
1,2,3,4,5ᣮ५,6,7,8,9,10,11,12,13,14
7600100044400000001
78250885019
7600100045200000001
78250885021
1-3,4,5,6,7,8,9-13,14,16,18,20,22
7600100046700000001
78250885022
7600100046800010001
78250885023
7600100046800020001
1-6,8-14,15,16,17,18,20-23
7600100050400000001
78250885024
7600100062500000001
78250885025
1,2,3,5,7
7600100066600000001
7600100054600000001
78250885027
1,2,3-5,6,7-17
7600100054900000001
78250885028
1 ,1,2-9
7600100057300080001
78250885029
1 ,1,2 ,2,3¢,3,4 ,4,5-8
7600100057300050001
7600100057300090001
7600100057300010001
1,3,6 ,6,8,10
7600100057300130001
7600100057300110001
1-6,7,8-11
7600100057300020001
7600100057300060001
1,2,3,4,5-14,15,16-18
7600100059200000001
78250885030
10,12
7600000100007320009
7800000000002070009
5400000100006810006
(140-170),(174-190)
5400000100006810007
(273-431),(130-138)
5400000100006810008
(192-286),(290-338)
5400000100006810009
(501-999)
5400000100006810010
5400000100004900006
5900000100001450001
5900000100001450002
5900000200002630005
5900000200001660003
5900000200001250005
5900000200004360006
(2-20),22,(1-13)
5900000200004330007
(8-10),(3-9)
1400000100000990001
1400000100000990002
677022
12-15
1400000100000990003
16-34
1400000100000990004
1400000100001200004
1400000100001200005
(38-46),45
1400000100001230001
1400000100001230002
1400000100001280001
1400000100001280002
102/2,106,45 
1400000100001370003
(14-84),(37-57)
1400000100001450001
(86-114),(77-89)
1400000100001450002
1,22,27
1400000100001750003
1400000100001830001
1400000100001830002
2500000100300200001
690920
05401000005
2500000100300040001
1-4,6-25,27,29-300
0200100100004230001
5,26,28
0200100100004230002
(129-173)
0200100100002600005
(175-301)
0200100100002600006
(1-187),(223-301)
0200100100002610001
0200100100002610002
(189-221)
0200100100002610004
0200100100002610005
0200100100002700001
0200100100002700003
(34-40),2,(54-300)
0200100100002700004
0200100100002700005
0200100100003450001
0200100100003450002
15-301
0200100100003450003
0200100100003630008
(209-301)
0200100100004190012
(67-75)
0200100100004260008
(77-301)
0200100100004260009
0200100100004630007
0200100100004630008
0200100100004630009
0200100100004630010
0200100100004630011
0200100100004630012
0200100100004630013
0200100100004630014
140ª
0200100100005450006
0200100100005880008
0200100100006200008
(35-301)
0200100100006200009
0200100100006210003
0200100100006210004
0200100100006210005
0200100100006560009
(18-54)
0200100100006560010
0200100100006560011
0200100100006560013
(73-79)
0200100100006560016
(94-132)
0200100100006560018
0200100100006800004
0200100100007720004
0200100100007720005
0200100100007810009
0200100100007810010
0200100100007810011
0200100100007810012
(149-155)
0200100100007810013
(157-171)
0200100100007810014
(173-301)
0200100100007810015
0200100100007810016
0200100100007810017
0200100100007810018
0200100100007810019
(110-300)
0200100100007810020
0200100100008110008
0200100100008110009
0200100100008490007
(26-66)
0200100100008700008
0200100100009440009
0200100100009440010
(31-53)
0200100100009440011
0200100100009440012
1ª
0200100100009580012
0200100100009580013
0200100100009580014
(189-219)
0200100100009640006
(221-301)
0200100100009640007
252
0200100100009640008
(254-300)
0200100100009640009
0200100100009640010
0200100100009640011
(110-250)
0200100100009640012
(123-147)
0200100100009940005
(149-301)
0200100100009940006
0200100100009940007
0200100100009940008
(110-134)
0200100100009940009
0200100100009940010
1-13,15-20,26,28-300
0200100100010790001
14,21-25,27
0200100100010790002
0200100100007850009
(53-331)
0200100100007850010
0200100100007850011
0200100100001840009
0200100100012000001
(21-301),(2-300)
0200100100012000002
450105
(86-94),(98-102),91
0200000500000270006
37ª
0200000500000510006
(16-26),(34-66)
0200000500000810007
3/41,31,35,52
0200000500000740003
0200000500000530003
0200000500000860005
32ª27
0200000500000860006
11ª1
0200000500000530004
1ª26
0200000500000110004
(5-21),(54-64),70
0200000500000850006
10
0200000500000020003
29ª16
0200000500000550006
17ª
0200000500000520008
0200000500000060002
5ª13
0200000500000110005
6ª9
0200000500000410004
0200000500000450002
0200000500000040002
1801100002400000001
427946
94220815006
1801100002500000001
94220815007
1801100002600000001
94220815008
13,13
4200000900004090003
650993
4200000900008270005
4200500200000000001
652449
32210553000
1-9,11-24
7601000021900010001
78226825019
7601000021900010002
7601000021900020001
7601000021900030001
7601000021900030002
1-3,5-6,8-10
7601000021900050001
7601000021900060001
7601000021900040001
7601000030000000001
78226825026
7601000004000000001
78226825011
7601000024600000001
78226825022
7601000023800000001
78226825021
7601000001100000001
78226825005
1-13,25
7601000016600000001
78226825001
7601000022900000001
78226825020
7601000005500000001
78226825012
7601000033000000001
78226825002
7601000014900000001
78226825015
7601000019900000001
78226820023
7601000027200000001
78226825025
7601000001500000001
78226825008
7601000031800000001
78226825024
7601000006800000001
78226825013
7601000032800000001
78226825010
7601000001400000001
78226825007
7601000020600000001
78226825018
7601000000800000001
78226825004
3,4,7
7601000011700010001
152280
1,1,2,4,5,5,6,6,7-13,14,14
7601000011700040001
15-28,34-36
7601000011700040002
1-3,5-33,35,40-51
7601000011700080001
1-3,5-9,14
7601000011700020001
7601000011700020002
21-23,25-27,29,30,30
7601000011700020003
1,3-6,9-16
7601000011700060001
1,3-14
7601000011700030001
1,3,6-12
7601000011700070001
7601000011700090001
1,6,8-10
7601000011700050001
7601000027600000001
152282
78226807039
15,17,19,21,23,25
7601000027600000002
7601000016300000001
78226807023
7601000003200000001
78226807003
27,29,31,33,35,37,39,41,43
7601000003200000002
1-25,27,29,31,33,35,37,39,41,43
7601000029900000001
78226807042
1-32,34,36,38
7601000015700000001
78226807020
7601000014400000001
78226807017
1-12,14,16,18,20,22,24,26,28,30,32,34,36
7601000026500000001
78226807035
7601000026500000002
7601000023500000001
78226807031
1-53,55,57,59,61,63,65,67
7601000009300010001
78226807012
1-18,20,22,24,26,28
7601000009300020001
7601000015500000001
152272
78226830012
1-13,15,17,19,21,23,25,27,29,31,33,35
7601000016200000001
78226807022
37,39,41,43,45,47,49
7601000016200000002
1,3,5,7-10
7601000024700000001
78226807033
7601000020100010001
152283
78226807027
7601000012100000001
78226807013
7601000004100010001
78226807005
7601000007800010001
78226807007
1-29,31,33,35,37
7601000007800020001
7601000007800060001
7601000007800030001
7601000007800040001
7601000007800050001
1-23,25,27,29,31,33,35
7601000014800010001
78226807018
1-5,7,9
7601000024000020001
78226807032
7601000024000010001
7601000027100020001
78226807037
1-17,19,21,23,25
7601000015800010001
78226807021
7601000015800020001
1-3,5,7,9,11,13,15,17,19,21
7601000014200010001
78226807016
1-7,9,11,15,17,19,21
7601000014200020001
23,25,27,29,31,33,35,37
7601000014200020002
1,3,5,7,9,11,13,15,17,19,21,23
7601000006100010001
78226830001
7601000006100090001
7601000006100100001
1,5,7,11,13,15
7601000006100140001
7601000006100130001
7601000006100110001
1-5,7,9,11,13,15
7601000006100080001
7601000006100120001
1,2,3,5,7,9,11,13,15,17,19,21,23,25,29
7601000006100070001
7601000006100070002
1,2,3,4,5,6
7601000006100060001
1-13,14,14,15-20,21,21,22-24,25,25
7601000006100050001
26-32,33,33,34,43,45-47,49,51,55
7601000006100050002
7601000006100050003
1,2,2,4,6-18,19,19,20-32,34,36,38,40
7601000006100040001
42,44,46,48,50,52,54,56,58,60
7601000006100040002
1-6,8,10,12
7601000006100160001
1,2,3,4,4,5-24,25,25,27,29,31,33,33
7601000006100150001
35,37,39
7601000006100150002
1,2,4,4,5-12
7601000006100030001
1,3,5,7,9,11,13,15,17,19,21,23,25,27
7601000006100020001
7601000006100180001
7601000006100190001
7601000006100200001
7601000006100210001
7601000006100220001
7601000006100230001
7601000006100240001
7601000006100250001
7601000006100260001
7601000006100270001
7601000006100280001
7601000006100280002
7601000006100170001
7601000006400000001
78226830003
7601000009600000001
78226830004
1-15,17,23,25
7601000012500000001
78226830007
7601000014500010001
78226830010
1-9,10,10,11-18,20,22
7601000014500000001
7601000016000000001
78226830013
7601000016100000001
78226830014
1,2 ,2,3-8,9 ,9,10-13,15,17,19,21,23,25
7601000016400000001
78226830015
7601000016700000001
78226830016
1-21,22,22,23,31,33
7601000020000010001
78226830020
1-5,7,9,11,13,15,17,23,25,27
7601000020000020001
1-6,7,9,11,13,15,17,21
7601000020000030001
7601000022000000001
78226830021
7601000024400010001
78226830022
1-13,15,19,21,23,25,27,29
7601000024400020001
1,2,2,3-13
7601000026600000001
78226830023
1 ,1,2-22,24,26,28
7601000029700000001
78226830024
7601000029700010001
7601000004900060001
78226820001
7601000004900070001
7601000004900030001
7601000004900090001
7601000004900110001
7601000004900100001
7601000004900020001
7601000004900010001
7601000004900050001
7601000004900040001
7601000004900080001
7601000032700000001
78226820003
7601000003300000001
78226820004
7601000004200000001
78226820005
7601000032100000001
78226820006
7601000004800000001
78226820007
7601000032300000001
78226820009
7601000007300000001
78226820010
7601000009400000001
78226820011
7601000009500000001
78226820012
7601000032500000001
78226820013
7601000010600000001
78226820015
7601000032400000001
78226820016
7601000014700000001
78226820019
7601000016500000001
78226820020
7601000032600000001
78226820021
7601000021300000001
78226820024
7601000023200000001
78226820025
7601000023600000001
78226820026
7601000023700000001
78226820027
7601000026100000001
78226820028
7601000027300000001
78226820029
7601000028700000001
78226820031
7601000029100000001
78226820032
2,3,4,5,5
7601000030600010001
152281
78226807043
7601000030600040001
7601000030600030001
1,1¡,1,2-23
7601000030600080001
1,1,2-23
7601000030600090001
7601000030600020001
7601000030600070001
7601000030600050001
7601000030600060001
1-3,5-7,9,9,10-16
7601000008000000001
78226807008
1-33,34,34,35-40,42-59,60,60,61-85,86
7601000022600000001
78226807029
86,87-98
7601000022600000002
1-35,37,38,38,39,41,43-45,47,51
7601000004300000001
78226807006
1-29,31,33,35,37,39,41,43,45,47,49,53
7601000018200000001
78226807025
7601000018200000002
1-43,44,44,44,45,45,46-102,104,105
7601000002500000001
78226807045
106,108,110,112,114,116,118
7601000002500000002
7601000002800000001
78226807002
1-6,7 ,7,8-14,15 ,15¡,15,16-17,18 ,18
7601000029600000001
78226807041
7601000029600000002
7601000023300000001
78226807030
1-34,36,38,40,42,44,46
7601000012700000001
78226807014
7601000009200000001
78226807011
1-72,74,76,78,80,82,84,86î,88,90,92,94
7601000030700000001
78226807044
96,98,100,102
7601000030700000002
1-16,17,17,18-40
7601000026800000001
78226807036
1-39,41,43,45
7601000028100000001
78226807040
1,2 ,2¡,2,3-22,24
7601000027500000002
78226807038
3,5,7,9,11,13
7601000005400020001
78226802001
2-7,8,8,9-14,18,20,21
7601000005400030001
1,3,3,4-16,18,20
7601000005400040001
7601000005400050001
7601000005400060001
7601000005400070001
1-4,5,5,6
7601000005400010001
2,2 ,3-12,13 ,13,14-23
7601000000200000001
78226802002
2-8,9 ,9,10-25,26,28-32,34,35,37
7601000003800000001
78226802004
7601000031600000001
78226802003
1-16,22 ,22,23-32,33 ,33,34,35 ,36,37 
7601000007400000001
78226802006
37,38-42
7601000007400000002
1-13,14 ,14,15-20
7601000009100000001
78226802008
1-4,6-11,13-36
7601000031700000001
78226802007
7601000011400000001
78226802009
1-5,7-9
7601000011600000001
78226802010
1-16,18,20,22,24,26
7601000020200030001
78226802012
1-15,17-30
7601000020200020001
1,2,4-8,10,12,14,16
7601000020200010001
1-13,16-21
7601000031500000001
78226802011
1-7,9-12,14-17,19
7601000022500000001
78226802013
1-6,8-10,12,14,16
7601000025000000001
78226802015
7601000024300000001
78226802014
1-5,7,8-12,14
7601000025600000001
78226802017
1-3,5-8,9 ,9,10,11,12 ,12,13-37,39,40 
7601000025900000001
78226802018
40¡,40¢,40,41,42 ,42,43 ,43,44-46,48-51
7601000025900000002
(47-69)
7600000100003980001
0200100100001080005
(7-99)
0200100100001550006
5ª
0200100100001550007
(101-133)
0200100100001550010
(12-132)
0200100100001550011
47ª
0200100100001700006
0200100100001840010
0200100100001900008
0200100100001980001
450099
0200100100001980002
0200100100001980004
0200100100001980005
0200100100002140010
1-15,(16-28),32,34-300
0200100100002230001
(17-33),30
0200100100002230002
127ª
0200100100002600007
0200100100002750007
(51-83)
0200100100002750008
0200100100002750010
(132-154)
0200100100002750011
(156-160)
0200100100002750016
0200100100002750017
0200100100002750018
(40-54)
0200100100002750021
(56-68)
0200100100002750023
0200100100002960001
0200100100002960002
(16-300),(19-301)
0200100100002960003
0200100100003290009
52,54,58,59,60,62
0200100100003290011
0200100100003290012
56,61
0200100100003290013
0200100100003290014
0200100100003290015
70,74,76
0200100100003290016
1-57,63-300
0200100100003500001
58-62
0200100100003500002
0200100100003540001
0200100100003540002
6-300
0200100100003540003
4-14,24-43
0200100100003590001
1-3,15-23,44-300
0200100100003590002
0200100100003670001
450091
1,3-300
0200100100003670002
0200100100004020012
127,(131-157)
0200100100004270009
(148-172)
0200100100004270010
0200100100004280009
(1-3),(17-23)
0200100100004280011
0200100100004280012
(163-167)
0200100100004280013
0200100100004280016
0200100100004280017
(71-301)
0200100100004750006
0200100100004750007
0200100100004810005
0200100100005060003
(8-24),(28-54),33,(53-77)
0200100100005060004
0200100100005250001
1-3,5-91
0200100100005250002
92-301
0200100100005250003
0200100100005390001
37-300
0200100100005390002
0200100100005610011
0200100100005700009
(17-103),(11-13)
0200100100005700010
(132-138)
0200100100005700011
(171-177),(185-195)
0200100100005700012
8,(30-78)
0200100100005700013
0200100100005790001
0200100100005790002
0200100100005790003
(49-59),(42-68)
0200100100006050001
(1-47),(2-40),(70-300),(61-301)
0200100100006050002
(37-65),69
0200100100006130006
(21-35),67,(71-501)
0200100100006130007
0200100100006510001
0200100100006510002
1,2-54,56-82,88
0200100100006530001
55,94-300
0200100100006530002
0200100100006620001
1-3,5-301
0200100100006620002
0200100100006630001
2-300
0200100100006630002
0200100100006640001
23-300
0200100100006640002
(189-301),(117-151)
0200100100006790007
(153-187)
0200100100006790008
0200100100006790009
(1-17),(2-52)
0200100100006960001
(19-301),(54-300)
0200100100006960002
(105-301)
0200100100007510008
(106-300)
0200100100007510009
0200100100007530005
21,34
0200100100007530006
0200100100007540005
2ª3
0200100100007550004
0200100100007550005
1-301
0200100100007640001
151ª
0200100100007640002
0200100100007710012
0200100100007710013
98ª3
0200100100007710014
3,4,6,15,22,20
0200100100007820001
1-2,5,7-14,16-19,21,23-301
0200100100007820002
4ª
0200100100007850012
2ª
0200100100007930001
3,7,9,11,12
0200100100007930002
1,2,4-6,8,10,13-301
0200100100007930003
0200100100008080007
70,74
0200100100008080008
0200100100008200005
22ª
0200100100008360001
0200100100008360002
(24-300),(13-301)
0200100100008360003
0200100100008520005
0200100100008520006
0200100100008520008
0200100100009050004
0200100100009050005
10,(34-40)
0200100100009050006
0200100100009050007
203
0200100100009180001
1-202,204-301
0200100100009180002
1ª1
0200100100009210001
1,2-301
0200100100009210002
1-3,5,7,9-300
0200100100009290001
0200100100009290002
0200100100009430001
1-10,12-301
0200100100009430002
0200100100009820008
0200100100009890006
0200100100009960003
(23-67)
0200100100009960004
(24-98)
0200100100009960005
0200100100010050010
0200100100010050011
(171-193)
0200100100010050012
0200100100010050013
(20-84)
0200100100010050014
139,(155-175)
0200100100010260006
0200100100010260007
0200100100010480001
0200100100010480002
0200100100010810001
7,9-300
0200100100010810002
33,(39-301),(40-52),(56-300)
0200100100011110001
(1-31),35,37,(2-38),54
0200100100011110002
4,29-300
0200100100011480001
1-3,5-28
0200100100011480002
0200100100000590001
450010
1-294,296-392
0200100100000590002
450017
0200100100001120001
0200100100001120002
0200100100001120003
1,3,(13-17),(23-301),(36-300),(2-28)
0200100100002370001
(5-11),19,21,(30-34)
0200100100002370002
(3-17),(2-58)
0200100100004930001
1,(19-31)
0200100100004930002
0200100100006400007
0200100100006400008
1-300
0200100100008860001
4-300
0200100100010070001
0200100100010070002
(5-33),(36-82)
3400000100013140001
(68-98),(73-101)
7100000100002580001
1-67,69,71
7100000100002580002
56,(147-149)
7800000000008780011
7800000000013760001
(7-33),(4-116)
7800000000013760002
2400000100001510006
21,23,24
2400000100003290001
51-65
2400000100004350006
660133
1,4,6,10
3101800100200010001
309540
3128
14440000000
2áâà,2áâà1,2áâà,4 ,4¡,8áâà,8áâà1
3101800100200010002
8áâà2,8áâà3,8áâà4,8áâà,8áâà1,8 
3101800100200010003
10 ,10¡,10¢,10¤,10¥,10¦
3101800100200010004
11,11 
3101800100200020001
3101800100200030001
3101800100200040001
2,4,4 ,4¡,4¢,6,8,8 ,10,10 ,10¡,10¢
3101800100200050001
12,12 ,12¡,12¢,14,16,16 ,16¡
3101800100200050002
1,3,5,5 ,7,9,11,11 ,11¡,11¢,13,13 ,13¡
3101800100200060001
13¢,13£,13¤,13¥,13¨,13ª,15,15 ,15¡,17
3101800100200060002
19,19 ,19¡,21,21 ,23,23 ,25,29,29 ,29¡
3101800100200060003
5,5 ,7
3101800100200070001
3101800100200080001
1,1 ,1¡,1¢,1£,1¤,1¥,1¦,1¨,1ª,1«,1¬,1¯
3101800100200090001
3,3 ,3¡,3¢,3£,3¤,3¥,3¦,3§,3¨
3101800100200090002
13,13 ,15 ,15¡,15¢,15£,15¤,15¥
3101800100200100001
2,2 ,2¡,2¢,2£,2¤,2¥,2¦,2¨,2ª,2«,2¬,4,6
3101800100200110001
(8-54)
3101800100200110002
2,2 ,2¡,2¢,2£
3101800100200120001
3101800100200130001
3101800100200140001
3101800100200150001
2,2 ,2¡,2¢,4,6,6 ,6¡,6¢,8,10
3101800100200160001
1,1 ,1¡,1¢,3,5,7,7 ,7¡,7¢,9,11,11 ,13
3101800100200170001
15,15 ,15¡,15¢,15¤,15¦,15¨,15«,15¬,17
3101800100200170002
19,21,23,27
3101800100200170003
1,1 ,1¡,1¢,1£,1¤,1¥,1¦,1§,1¨,1ª,1«,1¬
3101800100200190001
1¯,1à,1á,1â,1ã,1ä,1å,1æ,1è,1é,1í
3101800100200190002
1,5,5 
3101800100200200001
1,1¡,1¢,1£,1¤,1¥,3,3 ,3¡,5,5 
3101800100200210001
2,4áâà,8
3101800100200220001
2,2 ,2¡,2¢,4,4 ,6,6 ,6¡,14,14 ,14¢
3101800100200230001
16,16 áâà1
3101800100200230002
5,5 ,5¡,5¢,5£,7,15,21,23,23 ,25,31,37
3101800100200240001
1,1 ,1¡,1¢
3101800100300000001
4700500050000150001
41212808001
4700500050000010001
4700503600200000001
41212808000
4700503700000000001
4700503700000010001
4700503800000000001
4700503900000010001
4700503900000020001
4700503900000030001
4700503900000030002
4700503900000030003
4700503900000040001
4700503900000060001
41
4700503900000060002
4700503900000070001
4700503900000080001
4700503900000090001
4700503900000100001
4700503900000110001
4700503900000030004
4700501403800000001
4700501404300000001
4700501400200000001
4700501404200000001
4700501401000000001
4700501400300000001
4700501400400000001
4700501400500000001
4700501401200000001
4700501400600000001
4700501400700000001
4700501401300000001
4700501401400000001
4700501401500000001
4700501401600000001
4700501401700000001
4700501401800000001
4700501401900000001
4700501402000000001
4700501402100000001
4700501402200000001
4700503000200000001
4700502800200000001
4700502800300000001
4700501200400000001
4700501200200000001
4700501200500000001
4700501200300000001
4700501200600000001
4700501200700000001
4700501300200000001
4700501300300000001
4700501300400000001
4700501300500000001
4700501300600000001
4700500500200000001
4700500500300000001
4700501402300000001
4700501402400000001
4700501402500000001
4700501402600000001
4700501402700000001
4700501404400000001
4700501404500000001
4700501402800000001
4700501402900000001
4700501400800000001
4700501403000000001
4700501403100000001
4700501403200000001
4700501403300000001
4700501400900000001
4700501403400000001
4700501403500000001
4700501403600000001
4700501403700000001
4700501403900000001
41212840001
4700501404000000001
4700501404100000001
4700501500300000001
4700501500600000001
4700501500700000001
4700501500400000001
4700501500800000001
4700501500900000001
4700501501000000001
4700501501100000001
4700501500500000001
4700501501200000001
4700501501300000001
4700501501400000001
4700502400200000001
4700500303800000001
4700500300200000001
4700500300300000001
4700500306700000001
4700500301800000001
4700500301900000001
4700500302000000001
4700500300500000001
4700500302100000001
4700500302200000001
4700500302300000001
4700500300600000001
4700500302400000001
4700500302500000001
4700500302600000001
4700500303900000001
4700500300700000001
4700500300800000001
4700500302700000001
4700500302800000001
4700500300900000001
4700500301000000001
4700500302900000001
4700500303000000001
4700500303100000001
4700500303200000001
4700500303300000001
4700500303400000001
4700500303500000001
4700500303600000001
4700500303700000001
4700500301100000001
4700500304000000001
4700500304100000001
4700500304200000001
4700500301200000001
4700500304300000001
4700500304400000001
4700500304500000001
4700500304600000001
4700500304700000001
4700500301300000001
4700500301400000001
4700500304800000001
4700500304900000001
4700500301500000001
4700500305000000001
4700500305100000001
4700500300400000001
4700500301600000001
4700500305200000001
4700500305300000001
4700500305400000001
4700500305500000001
4700500305600000001
4700500305700000001
4700500305800000001
4700500305900000001
4700500306000000001
4700500301700000001
4700500306100000001
4700500306200000001
4700500306300000001
4700500306400000001
4700500306500000001
4700500306600000001
4700503900000130001
4700503900000100002
4700503900000100003
4700503900000140001
4700503900000080002
4700503900000150001
4700503900000160001
4700503900000030005
4700501500200000001
4700501700200000001
4700501900200000001
4700502000400000001
41212839006
4700502000500000001
4700502000600000001
4700502000700000001
4700502000800000001
4700502000200000001
41212893006
4700502000300000001
4700502000900000001
4700502001000000001
4700502001100000001
4700502001200000001
4700502100200000001
4700502100300000001
4700502100400000001
4700500600200000001
4700500700200000001
4700500800300000001
4700500800200000001
4700501600200000001
4700501600300000001
4700500900200000001
41212812003
4700502900200000001
41212550000
4700502300400000001
4700502300500000001
4700502300200000001
4700502300300000001
4700503400200000001
4700503400300000001
4700503400400000001
4700503400500000001
4700501800200000001
4700501800400000001
4700501800300000001
4700501800500000001
4700500400200000001
4700500400300000001
4700500400600000001
4700500400700000001
4700500400800000001
4700500400900000001
4700500401000000001
4700500401100000001
4700500401200000001
4700500401300000001
4700500401500000001
4700500400400000001
4700500401400000001
4700500401600000001
4700500400500000001
4700500401700000001
4700500401800000001
4700500401900000001
4700500402000000001
4700500402100000001
4700500402200000001
4700502500200000001
4700502500300000001
4700502500400000001
4700502500500000001
4700502500600000001
4700501000300000001
4700501000400000001
4700501000500000001
4700501000200000001
4700500200600000001
4700502600200000001
41212839010
4700501100200000001
4700501100300000001
4700501100400000001
4700503900200000001
4700503100200000001
4700503200200000001
4700503200300000001
4700502700500000001
41212848016
4700502700200000001
4700502700300000001
4700502700400000001
4700502700600000001
4700500307100000001
4700500307200000001
4700500307300000001
4700500307400000001
4700502100500000001
4700501600400000001
4700502200200000001
4700502200300000001
4700502200400000001
4700502200500000001
4700502200600000001
4700502200700000001
4700502200800000001
4700502200900000001
4700500402300000001
4700502500800000001
4700501100500000001
4700504100200000001
4700504100400000001
4700504100500000001
4700504100600000001
4700504100700000001
4700504100800000001
4700504100900000001
4700504101000000001
4700504101100000001
4700504200200000001
4700504200300000001
4700504200400000001
4700504200500000001
4700504200600000001
4700504200800000001
4700504200900000001
4700504300200000001
4700504300300000001
4700504300400000001
4700504300500000001
4700504300600000001
4700504300700000001
4700504300800000001
4700504300900001000
4700504301000000001
4700504301100000001
4700504301200000001
4700504301300000001
4700504301400000001
4700504301500000001
4700504301600000001
4700504301700000001
4700504301800000001
4700504301900000001
4700504302000000001
4700504302100000001
4700504302200000001
4700504302300000001
4700504302400000001
4700504302500000001
4700504302600000001
4700504302700000001
4700504302800000001
4700504302900000001
4700504303000000001
4700504303100000001
4700504303200000001
4700504303300000001
4700504303400000001
4700504303500000001
4700504303600000001
4700504303700000001
4700504303800000001
4700504303900000001
4700504304000000001
4700504304100000001
4700504304200000001
4700504400200000001
35ª2
4700504500000040001
41212820000
15ª1
4700504500000030001
39ª1
4700504500000020001
4700504500000010001
4700504900000050001
41212856000
4700505800300000001
32-200
4700505800200000001
4700504304300000001
4700504304400000001
4700504201000000001
4700504201100000001
4700504201200000001
4700504201300000001
4700504201400000001
4700504201500000001
4700504201600000001
4700504101200000001
4700504101400000001
4700507500200000001
118864
4700500100300000001
1-500
4700507500300090001
4700507500400000001
4700507500500030001
4700507500500000001
4700507500300000001
4700507500600000001
4700507600200000001
4700504304700000001
4700504304800000001
4700507300800010001
4700507300900000001
4700507301000000001
4700507301100000001
4700507301200000001
4700503501100000001
4700503501200000001
4700503501300000001
4700503501400000001
4700503501500000001
4700503501600000001
4700503501700000001
4700503501800000001
4700503501900000001
4700503502000030001
4700503502000000001
4700503502100000001
4700503502200000001
4700503502300000001
4700503502400000001
4700503502500000001
4700503502600000001
4700503502700000001
4700503502800000001
4700503502900000001
4700503503000000001
4700503503100000001
4700503503200000001
4700503503300000001
4700503503400000001
4700503503500000001
4700503503600000001
4700503503700000001
4700503503800000001
4700503503900000001
4700503504000000001
4700503504100000001
4700503504200000001
4700503504300000001
4700503504400000001
4700503504500000001
4700503504600000001
4700503504700000001
4700503504800000001
4700503504900000001
4700503505000000001
4700503505100000001
4700503505200000001
4700503505400000001
780
4700503505500000001
4700503500000000001
4700507000300000001
4700507000400000001
4700507000500000001
4700507000600000001
4700507000700000001
4700507000800000001
4700507000900000001
4700507001000000001
4700507001100000001
4700507001400000001
4700507001500000001
4700507001600000001
4700507001700000001
4700507001800000001
4700507001900000001
4700507002000000001
4700507002100000001
4700507002200000001
4700507002300000001
4700507001200000001
4700507002400000001
4700507002500000001
4700507002600000001
4700507002700000001
4700507002800000001
4700507002900000001
4700507003000000001
4700507003100000001
4700507700200000001
4700507800200000001
41212802000
4700507900200000001
4700507900300000001
4700507900400000001
4700507301300000001
4700504700400000001
4700504700500000001
4700504700600000001
4700504700700000001
4700504700800000001
4700504700900000001
4700507100300000001
4700507100400000001
4700507100500000001
4700508000200000001
41212824000
4700508000300000001
4700508000400000001
4700508000500000001
4700508000600000001
4700508000700000001
4700508000800000001
4700508000900000001
4700508001000000001
4700508001100000001
4700508100200000001
4700508100300000001
4700508100400000001
4700508100500000001
4700508100600000001
4700508100700000001
4700508100800000001
4700508100900000001
4700508101000000001
4700508101100000001
4700508101200000001
4700508101300000001
4700508101400000001
4700508101500000001
4700508101600000001
4700508101700000001
4700508101800000001
4700508101900000001
4700508102000000001
4700508200200000001
4700508200300000001
4700508200400000001
4700508200500000001
4700508200600000001
4700508200700000001
4700508200900000001
4700508201000000001
4700508201100000001
4700508201200000001
4700508201300000001
4700508201400000001
4700508201500000001
4700508201600000001
4700508102100000001
4700508102200000001
4700508102300000001
4700508102400000001
4700508201700000001
4700506000200000001
4700506000300000001
4700507400200000001
41212820010
4700507400300000001
4700507400400000001
4700501000600000001
4700501300700000001
4700501404600000001
4700503800200000001
4700503800300000001
4700503800400000001
4700506100300000001
4700506100200000001
4700506200200000001
4700506300200000001
4700506300300000001
4700506400500000001
4700506500200000001
4700506600200000001
4700506700500000001
4700503505300000001
4700503505600000001
4700505700200000001
41212820005
4700505700300000001
4700505700500000001
4700505700600000001
4700505700700000001
4700505700800000001
4700505600300000001
4700505300200000001
4700505000400000001
4700505000500000001
4700504800300000001
4700506900300000001
4700505400400000001
4700507200200000001
4700505600600000001
4700503500200000001
4700503500400000001
4700507100200000001
4700500100600000001
4700500100800000001
4700500100900000001
4700505900300000001
4700503505500000002
4700504800400000001
4700504700200000001
4700504400300000001
4700504304900000001
4700500010800250001
4700506200300000001
4700506300600000001
4700506300700000001
4700506300800000001
4700506400600000001
4700506400700000001
4700506400800000001
4700506400300000001
4700506400400000001
4700508300200000001
4700508300300000001
4700508300400000001
4700508300500000001
4700508300600000001
4700508300700000001
4700508300800000001
4700508300900000001
4700508301000000001
4700508301100000001
4700508301200000001
4700508301300000001
4700508301400000001
4700508301500000001
4700508301600000001
4700508400200000001
4700508400300000001
4700508400400000001
4700506200400000001
4700503505700000001
4700500056200000001
4700508500200000001
4700508500300000001
4700508500400000001
4700508500500000001
4700508600300000001
4700508600200000001
4700508700200000001
41212856001
4700505500300000001
4700508102500000001
41212757003
4700505800400000001
4700500101300000001
4700500101500000001
4700500101400000001
4700500101600000001
4700500101700000001
4700500101800000001
4700500101900000001
4700500102000000001
4700500102100000001
4700500102200000001
4700508500600000001
41212757000
4700500200900000001
4700500011600410001
4700500008000340001
4700500008000350001
4700500008000360001
4700506400200000001
4700506900400000001
4700506900500000001
4700500050000200001
4700500008800020001
4700500056300000001
41212812008
(114-120),(115-121)
1600000100006290004
1-39,(41-45),47-999
3300000100002350001
32,40,42,44,46,46,46
3300000100002350002
6100000100020590002
6900100037200000001
170554
6949
28220810014
6900100019900000001
170555
28220810001
6900100042500000001
28220810010
6900100056100000001
170530
28220882020
6900100015400000001
170508
28220818001
6900100033200000001
170502
28220818012
6900100043000000001
28220818015
6900100047500000001
28220818017
6900100055200000001
28220818019
6900100058600000001
170501
28220818006
6900100004500000001
170503
28220818020
6902601501400000001
171427
28247806015
6902601000400000001
171400
28247840001
6902601001000000001
28247840008
6900100030600000001
170562
28220830029
6900100059800000001
170560
28220830024
6900100036800000001
28220830019
6902600700200000001
28247808001
6902600700300000001
28247808010
6900100007700000001
170535
28220824002
6900100005600000001
170505
28220824019
6900100003500000001
170512
28220868022
6900100003800000001
170507
28220808006
6900100006100000001
170515
28220878004
6900100006400000001
170546
28220808001
6900100008500000001
170540
28220808025
6900100010600000001
170533
28220814004
6900100011500000001
28220882006
6900100009500000001
170518
28220848005
6900100012600000001
170524
28220838007
6900100013000000001
170516
28220840008
6900100012100000001
170550
28220848006
6900100014800000001
28220830007
6900100014900000001
28220840009
6900100015500000001
28220840010
6900100037600000001
28220814009
6900100042700000001
170538
28220824039
6900100046500000001
28220814012
6900100050700000001
28220830026
6900100050900000001
170537
28220880009
6900100052500000001
170521
28220838034
6900100053600000001
28220878001
6900100054200000001
28220878016
6900100055700000001
28220838036
6900100055800000001
170536
28220880001
6900100056300000001
170504
28220824015
5200000400001800001
1000000100000040002
185910
1001
86401000000
1000000100000040003
185000
1,6,8,10,12,13,14,18,20,24,25,26
1000000100000040001
185035
1,2,3,4,5,6,9,10,13,15,17,19,22,28,30
1000000100000030001
1000000100000030002
1000000100000030003
1,1,2,3,4,5,5,7,9,11,11,11,13
1000000100000090001
185011
12,14,15,17,19,20,21,22,23-35,41,43,51
1000000100000090002
185026
53,55,57,59,63,65,69,71,73
1000000100000090003
1000000100000090004
9,11,13,15,17,19,21,23,25,29,31,33,35,37
1000000100000230001
185005
39,68,70,72
1000000100000230002
6,10,28,34,40,58,60,62,64,66
1000000100000230003
185030
1000000100000230004
1,2,3,5,6,8,10,12,14
1000000100000320001
16,17,18,20,24-27,34,36,40,41,43-47,49
1000000100000320002
1000000100000320003
3,5,7,8,10,12-15,18,20,22,23,25,27,28-31
1000000100000400001
33-35,37-47,(48-62)
1000000100000400002
76,78,82,(90-106)
1000000100000400003
185034
1000000100000400004
7,18
1000000100000580001
185001
1-6,(8-16)
1000000100000580002
185031
1000000100000580003
1,4,5-11,12,14,(20-32),35,38,39,41
1000000100000670001
1000000100000670002
1000000100000670003
1,5,(7-15),28,38,40,42,44
1000000100000730001
1000000100000730002
1000000100000730003
1,3,4,6,8,10,11,12,14,18,19,20,22,24
1000000100001630001
1000000100001630002
1000000100001630003
11,15,17,19,21
1000000100000940001
25,31
1000000100000940002
1000000100000940003
1000000100000960001
(2-8),20,22,24,24,25-29,32,33,34
1000000100000960002
34,35,37,39-46,48,50,51,52,54,55,57
1000000100000960003
57,57,59,62,64,(67-81)
1000000100000960004
1000000100000960005
1000000100000960006
1,23,43
1000000100001020001
1000000100001060001
185033
8,14,51
1000000100001060002
1000000100001060003
1000000100001060004
1000000100001130001
1000000100001130002
1000000100001130003
6,8,10,11¡,13,14,15,17,19,20,21,23,25,27
1000000100001130004
1000000100001140001
1000000100001140002
1,2,3,4,5,6,7,8,11
1000000100001140003
9,15
1000000100001140004
1000000100001160001
1,12,14,16,18,20,22,24,26,28,30
1000000100001160002
1000000100001160003
2,4,5,6,8,10,12,14
1000000100001210001
185002
1000000100001210002
1000000100001230001
24
1000000100001230002
2,10,12,14,16,18,20,24,26,28,30,32
1000000100001230003
25,29,31,33
1000000100001230004
1000000100001240001
1000000100001240002
1000000100001240003
1000000100001240004
20,22,24,26,30,32,34,36
1000000100001250001
25,27,29,31,35,37,39
1000000100001250002
1-19,21,23
1000000100001250003
1000000100001250004
1,3,5,7,13
1000000100001290001
29,31,35,37,39,41,50,52,61
1000000100001290002
1000000100001290003
1000000100001300001
1-4,6-14,16-22,26
1000000100001300002
1000000100001300003
1000000100001390001
185028
2,6,33
1000000100001390002
1,3,4,5,7-18,20-32,33,33,34-38
1000000100001390003
1000000100001390004
17,17,19
1000000100001410001
1,3,5,8,9,11
1000000100001410002
1000000100001410003
1000000100001410004
47,51
1000000100001450001
1000000100001450002
185014
1000000100001450003
1000000100001450004
1000000100001490001
1-7,9,11,15,17,19,21,23,24,26,28,30,32
1000000100001490002
1000000100001490003
1,2,3,4,5,6,7,11,13,15
1000000100001560001
1000000100001560002
185019
21-39
1000000100001560003
1000000100001560004
1000000100000540001
1-11,13-28
1000000100000540002
1000000100000540003
5,7,20,22,29-33,35,37,39
1000000100001690001
40-44,46,47,50,52,53,54,56,58-60
1000000100001690002
1000000100001690003
1000000100001750001
16,18,19,20,21
1000000100001750002
1,3,5-15,17
1000000100001750003
1000000100001750004
1000000100001770001
26-39,41,43,45
1000000100001770002
1000000100001770003
12,14,16,18,22,24,28
1000000100001970001
2,5,6,8,9,10,17,19,29,37,39,43,47,51
1000000100001970002
1000000100001970003
1,3,5,7
1000000100002030001
2,4,6,8,10,12
1000000100002030002
1000000100002030003
74,76,78,80,82
1000000100002060001
30,48,50
1000000100002060002
1000000100002060003
1000000100002150001
1000000100002150002
1000000100002150003
1000000100002420001
5,11
1000000100002420002
(1-9),11,11,13,15,17,19
1000000100002420003
1000000100002550001
1000000100002550002
(10-28),(32-48)
1000000100002550003
(11-21),33
1000000100002550004
1000000100002840001
1000000100002840002
1000000100002840003
1000000100002840004
1,3,(7-53)
1000000100002840005
2,6,8,8
1000000100003420001
9,10,11-13,(16-26)
1000000100003420002
185013
1000000100003420003
1000000100003390001
1-6,8,10-13
1000000100003390002
(15-21),(25-37)
1000000100003390003
20,(30-64)
1000000100003390004
1000000100003390005
102,107
1000000100003280001
185007
2-18,(19-27),31,33,34,36,37,38,39,41,43
1000000100003280002
47,56,58,62,64,70,72,90,94,98
1000000100003280003
1000000100003280004
1000000100003210001
2,4-7,9,10,12-25,27,29
1000000100003210002
1000000100003210003
1000000100003460001
4,5,8,10,11,13,14,15,17,21,23,25
1000000100003460002
1000000100003460003
1000000100003030001
3,7,11,13,17,19,21,23,25,27,29,31,33
1000000100003030002
1000000100003030003
1,2,4,5,6,7,9,11,12
1000000100003060001
3,8,10
1000000100003060002
1000000100003060003
(3-21),25,27,35,39,41,(45-57)
1000000100001020002
2,(6-12),18,22,24,26,(38-52)
1000000100001020003
1000000100001020004
1000000100001220001
2,4,8,26,28,30,31,34,35,36,37,39-45,47
1000000100001220002
48,50,51,53
1000000100001220003
1000000100001220004
1-9,12,14-39,41,43-47,(51-72)
1000000100002060004
51,53,(61-73)
1000000100002060005
1000000100002830001
1000000100002830002
1,3,4,6-37,(39-53)
1000000100002830003
1000000100002830004
1,2,3,5,8
2701400000700240001
682843
2709
2704
08242565000
4,6,7,9,10
2701400000700240002
682846
2700000700000010001
682803
08418000000
63,(65-99),(36-100)
2700000700000010002
682813
(1-61),(2-30)
2700000700000010003
682818
1-4,6,8-50
2700000700000150001
682817
2700000700000150002
2700000700000190001
(25-99),(16-100)
2700000700000190002
2700000700000220001
(31-151),(28-152)
2700000700000220002
2700000700000230001
(19-99),(22-100)
2700000700000230002
(2-8),7
2700000700000300001
682820
(10-100),1,3,5,(9-99)
2700000700000300002
2700000700000380001
682800
15-100
2700000700000380002
2700000700000420001
29-100
2700000700000420002
2700000700000540001
12-100
2700000700000540002
2700000700000780001
1,2-50
2700000700000780002
9,11,15
2700000700000940001
2,3,4,7,10
2700000700000940002
1,5,6,8,12,13,14,16-99
2700000700000940003
(1-19),(2-150)
2700000700000950001
(21-151)
2700000700000950002
2700000700000960001
7-50
2700000700000960002
2700000700001090001
1-3,5-100
2700000700001090002
5900000100016710001
(89-219),(88-124)
6400000100015060004
157,154,154 
6400000100011540004
410038
6400000100005860004
3500100029600000002
3500100028500000001
160509
19220868017
3500100028900000001
19220868031
3500100027400000001
160507
19220860017
3500100000600030001
160550
19220836001
3501000001600000001
162017
3509
19224864000
3501000001400050001
162063
19224876001
3501000001400000001
3501000037100000001
19224864038
3501000001900000001
162018
19224840001
3501000001300000001
162011
19224832001
3501000001200000001
162013
19224852001
3501000002000000001
162030
19224828001
3501000001100000001
162035
19224872002
3500100002200000001
160523
19220864001
9,5,4,10,8
2404100000600210001
663920
2440
04257808000
(83-97),(58-148)
3402100100000870003
(47-999)
2300000100005410005
2300000100006530001
350010
2300000100006530002
2300000100005840001
(36-50),24,27
2500001200001640002
(1-9),11,12,14,18
2500001200001890001
(19-57),(26-38),17
2500001200000940001
4200000400001410001
652816
4200000400001410002
43ª
4200000400001410003
652809
5200000201100070001
5200000201200050001
8ª
7400000100019660001
0200100100007810021
61ª2
0200100100006560021
141ª1
0200100100004280021
0200100100005060005
15ª2
0200100100005700014
12ª2,22ª1,9ª1
0200100100006080004
26ª
0200100100006130008
29ª2
0200100100006130009
103ª
0200100100007510010
2ª4,2ª5,2ª7
0200100100007550006
172ª
0200100100007640004
12ª28,12ª29
0200100100007930004
21ª,21ª
0200100100008860004
32ª
0200100100009820009
12-301
0200100100006120003
1-44,46-56,57,59,61,63-301
0200100100002070001
0200100100006830011
4000000100006870003
4000000100006870004
4000000108700000001
248920
4000000104400000001
248022
4000000105500000001
4000000105600000001
248918
4000000108300000001
248017
108-129,131
4000000100004630003
4000000100004690003
4000000100004690004
248010
61-63,67-73
4000000100005310003
60,75,77,65
4000000100005310004
4000000100005370003
3600000100001100003
3600000100005950003
3600000100008640001
3600000100008640002
3600000100008750001
3600000100008750002
3600000100007440005
3600000100007440006
37,39,41,(40-998)
3600000100001620003
3600000100008530003
3600000100006660001
50,50,52
3600000100006660002
5000500049700000001
46208834016
5000500003400000001
46208807016
5000500003500000001
46208807024
5000500004700000001
46208813004
5000500051800000001
46208501000
5000500008900000001
46208870016
5000500010700000001
46208808006
5000500046200000001
46208846001
5000500014400000001
46208822007
5000500014600000001
46208802003
5000500017300000001
46208828001
5000500018800000001
46208816016
5000500050900000001
46208852007
5000500020300000001
46208804007
5000500020400000001
46208834009
5000500021000000001
46208825006
5000500021600000001
46208864011
5000500024100000001
46208828018
5000500024300000001
46208816019
5000500050400000001
46208852027
5000500026500000001
46208824017
5000500027600000001
46208839019
5000500028000000001
46208864018
5000500031700000001
46208870009
5000500031800000001
46208808013
5000500032700000001
46208855001
5000500033600000001
46208831012
5000500033800000001
46208855010
5000500035100000001
46208828017
5000500035800000001
46208808014
5000500036000000001
46208816018
5000500036200000001
46208563002
5000500036600000001
46208834010
5000500037400000001
46208831009
5000500037600000001
46208864016
5000500037700000001
46208870014
5000500038600000001
46208828009
5000500038800000001
46208802006
5000500039100000001
46208816026
5000500040100000001
46208804009
5000500040300010001
46208837005
5000500040700000001
46208870012
5000500040900000001
46208807022
5000500042400000001
46208852005
5000500044300000001
46208816007
5000500044900000001
46208834014
5000500045400000001
46208808018
5000500045900000001
46208810014
5000500046000000001
46208852002
(2-46),(1-51)
7201100100000740001
(48-68),(53-69)
7201100100000740002
(1-11),(2-24),26,(28-46)
7201100100002650001
(17-39),26
7201100100002650002
7201100100002660001
(15-23),(18-24)
7201100100002660002
(1-69),(24-74)
7201100100002850001
(71-97),(76-98),100,102,104,106,108
7201100100002850002
(62-90),85,87,79/1,79/2
7201100100001220002
7201100100002210003
129,131,133
7400000900001850012
(130-154)
7400000900001850006
7202100100000140001
(29-998),(32-999)
7202100100000140002
7202100100001040005
(11-999),(14-999)
6100000100020070001
6100000100020070002
(21-999),(8-999)
6100000100019960001
6100000100019960002
(13-999),(28-999)
6100000100019970001
6100000100019970002
(11-999),(12-999)
6100000100020020001
6100000100020020002
6100000100019980001
6100000100019980002
6100000100020060001
6100000100020060002
6100000100020030001
6100000100020030002
3300000100002140009
68,70,79,82,85,107,108,113,113,113
2700000100001480007
1,1,3,5,5,7,9,10,11,13,15,17,27,28,33
2700000100001480008
5400000100007530003
3,5-7,9/12,10,11,14-21,22/27,26
6900000400001080002
1-3,6
6900000400001190001
8,8 ,10,12,14-16,18,20,22
6900000400001190002
1-4,6-30
6900000400001230002
11/12
6900000400001440001
4,7,8,9/12,12,14
6900000400001440002
14/10,15-19,21/12,23,27,28,33-37
6900000400001320002
(2-48),(1-47)
3900000100002800001
(49-997),(50-998)
3900000100002800002
236901
3,6,8
2500000100000460001
1,2,61
2500000100000460002
4000000106200000001
4000000103700000001
248029
4000000105200000001
4000000112500000001
248007
(3-31),(4-48)
6900000600001540001
6900000600001580001
6900000600001580002
103-999,(92-102)
6900000600001840006
7/8
7601500100007670001
9/13
7601500100007670002
34/32,43/30
7601500100008910001
45/29
7601500100008910002
101/9,102/5 
7601500100010400001
103/8
7601500100010400002
22/30
7601500100011820001
25/32
7601500100011820002
6300000400000630003
1,2/2
1400000100000690002
1400000100001630002
1400000100001730003
677016
4/1
1400000100002450004
24/1,26,28,30/2
1400000100002700003
1400000100001290005
677011
5200000100010240001
5200000100010240002
(1-177),(2-166)
6100000300000800001
346883
6181
6141
60407000000
(179-199),(168-190)
6100000300000800002
346884
6100000300001110001
(13-37),(12-54)
6100000300001110002
(83-93),(82-112)
6100000300002450001
346881
(37-67),(36-141)
6100000300000310001
346887
(69-87)
6100000300000310002
346882
(57-107),(14-58)
6100000300000330001
(111-125),(60-78)
6100000300000330002
(157-168),(126-146)
6100000300000660001
(59-151),(40-124)
6100000300000660002
(21-55),(2-38)
6100000300000660003
346894
6100000300000660004
346880
(111-333),(112-138)
6100000300000680001
346892
(1-107),(2-108)
6100000300000680002
(91-95),(74-76)
6100000300003080001
6100000300000810001
(1-119),(2-58),72
6100000300000810002
(144-186)
6100000300000940001
6100000300001100001
(121-193),(112-180),188
6100000300001100002
(105-117),90
6100000300001790001
1,(3-101),(2-86)
6100000300001790002
(83-145),(84-102)
6100000300001500001
6100000300002450002
6100000300001500002
6100000300000010001
29,37,32,36,42,44,56
6100000300000010002
346893
(113-199)
6100000100000780003
120
2400000100004110005
6800000400001680001
6800000400001680002
5500800100000160001
5500800100000160002
7400000100010380001
6/2,6/21,6/2
2200000100003270006
0202600100001700003
0200100100006360001
(1-9),11-300
0200100100006360002
0200100100006390001
8-17
0200100100006390002
0200100100007530007
450079
73ª1
0200100100006560022
0200100100001500001
1-24,26-300
0200100100001500002
5200000100003180001
4,4 ,4¡,4£,4£/2
2400000100007240006
(43-47),(51-53),(61-67),(44-56),64
2400000400000210002
662972
2452
04535000000
(3-57),(4-56)
2400000400000270001
662971
(63-67),66,68
2400000400000270002
(33-45),(48-56)
2400000400000090001
(1-31),(2-40),44
2400000400000090003
(3-43),(4-44)
2400000400000130001
(45-57),67,(48-56)
2400000400000130002
2400000100006250005
2400000100000710007
2400000100004430004
6800000500500000001
393360
6824
68405000000
21-28
6800000500500000002
1-196
6800700000200000001
393378
6806
68210875001
6800700000600000001
68210875002
1-167
6800700000500000001
393361
68210875003
6800700001000000001
393383
68210875009
6800700001500000001
393362
68210875010
1-136
6800700000400000001
68210875012
6800700000400060001
6800700000400060002
6800700000400060003
34-35
6800700000400060004
6800000500001020001
6800000500001020002
6800000500001020003
35
6800000500001020004
6800700008200090001
393371
68210830008
47
6800000500000750001
49
6800000500000750002
49
6800000500000750003
49
6800000500000750004
49
6800000500000750005
50
6800000500000750006
50
6800000500000750007
50
6800000500000750008
1,2-5,1/3,1/12,7/1,11,12/1,12 ,12¡,31 
5001400100000530001
142700
5003
46228501000
12¢,13 ,13¡,13£,14-16,(18-24),25-30,31
5001400100000530002
32,34,38,40,46 ,74,74 ,(48-72),(76-84)
5001400100000530003
1/3,4,5/2,6,7,9
5001400100000570001
5001400100000580001
5001400100000590001
5001400100000480001
1,1 ,2-7
5001400100000470001
5001400100000540001
1,1 ,1¡,2-5
5001400100000550001
1-9,10,10 ,11,12,14-18,20,20 ,21-24,26
5001400100000250001
142703
5001400100000320001
5001400100000400001
1,4,6,8,10-19,(21-31)
5001400100000510001
5001400100000660001
5001400100000140001
5001400100000350001
2-5,7
5001400100000240001
5001400100000730001
5001400100000830001
5001400100000870001
1,3,4,4 ,5,6,6 ,6¡,7,8,8 ,9,10,10 ,11,12
5001400100000040001
12 ,13,14,14 ,15,16,16 ,18,18 ,18¡
5001400100000040002
1-10,12,12 ,13-15,16,16 ,17-28,30-53,55
5001400100000630001
56,58-83,84/1,84/2,84/3,(85-89)
5001400100000630002
1,1 ,3 ,4,5,6,6 ,7-12,13,13 ,16,18-25
5001400100000190001
(27-45),47 ,47¡,49,49 ,(51-57)
5001400100000190002
(61-67)
5001400100000190003
5001400100000160001
3-14,(16-24)
5001400100000130001
1-7,8/1,8/2,9-18,19,21,25
5001400100000180001
2,2 ,2¡,3-12,14-18,19,19 ,20-22
5001400100000390001
142702
(26-32),34/1,34/2,44,(48-56)
5001400100000390002
1, ,¡,¢,£,2/1,2/2,2/3,3-6,7,7/2,8
5001400100000340001
142701
9/1,9/2,10,11/1,11/2,12-14,15/1,15/2,16
5001400100000340002
17/1,17/2,18,19/1,19/2,20-26,(28-32)
5001400100000340003
34-40,(42-48),(52-70),74,78
5001400100000340004
5001400100000980001
2-6,8,10,12 ,13-15,16,16 ,17-23,25,27,29
5001400100000370001
32-35,37-41,43
5001400100000370002
(1-5),7,7/1,7/2,11,13,16,31,32,37
5001400100000150001
75,77,83
5001400100000110001
2401100003400030001
663720
2410
04213809003
2401100003400010001
2401100003400020001
2401100003300020001
663721
04213809005
2401100003300030001
2401100003300010001
7200000100001840001
625006
7200000100000330003
6ª1
7200000100000500001
(121-135)
7200000100001080012
47ª1
7200000100002170003
98ª2 
7200000100002310005
16 ª1
7200000100000240001
3ª1,3ª1 ,3ª1¡
7200000100001030001
71ª2
7200000100001040003
8ª1
7200000100001840007
10ª2¡
7200000100005490001
7200000100002780003
164ª2
7200000100001660011
7200000100002450009
71,72
7200000100002870005
7200000100002870008
29ª1,29ª2,29ª3,29ª15
7200000100003080009
7200000100002430005
7200000100003080013
118ª2 
7200000100003080014
1£
7200000100002870017
1£ª1
7200000100002870018
1£ª2
7200000100002870019
7200000100002830005
7200000100005650001
7200000100001660012
274
7200000100001660013
7200000100002870020
47ª7
7200000100003240001
7200000100004970001
104ª2
7200000100004690001
7200000100005120001
7200000100000000001
71401000000
7200000100002450011
7200000100002450012
7200000100002450013
7200000100002450014
82,84,86
7200000100003640004
7200000100001130004
7200000100001190004
7200000100002830006
7200000100002910004
1-3,22,4,17,18
7200000100001730004
625059
7200000100005330004
7200000100005330005
7200000100005470004
7200000100000410001
169,170
7200000100007340001
625015
2,3,6
7200000100001730006
7200000100005040004
7200000100002150006
7200000100002150007
130,126,132
7200000100005320004
55-85,54-84
7200000100005400001
102,167
7200000100002340012
(93-97),113,115
7200000100005470005
7200000100000340001
7200000100000340002
7200000100000830001
7200000100001030004
7200000100001030005
7200000100001030006
51ª,51ª
7200000100001030007
7200000100001030009
7200000100001030010
44,64,66,72,152
7200000100001030011
66ª
7200000100001030012
41-135
7200000100001030013
7200000100000830002
7200000100001070001
1,3,5,10,12,19,21,23,24,26,79,80
7200000100001090001
89-109
7200000100001090002
7200000100001510001
32-54
7200000100001510002
7200000100001520001
14,22,13
7200000100001520002
11,8
7200000100001890002
625047
7200000100001890003
7200000100001890004
16-29
7200000100001890005
33,34,36,51
7200000100001890006
7200000100001890007
8-20
7200000100002200001
7200000100002010001
625056
7200000100002260001
625029
7200000100002350001
7200000100000440001
7200000100003540001
102,108,104,106
7200000100003540002
56ª,74ª
7200000100003540003
7200000100003540005
6,8,49,74,76,35
7200000100000500002
(18-30),(21-27)
7200000100000500003
7200000100003720001
7200000100005760001
54ª
7200000100005760002
7200000100005760003
7200000100004210001
7200000100004210002
7200000100005930001
7200000100005030003
135ª
7200000100005030004
1,8,23,25,27,32,36,49,26,28,30,45,47,43
7200000100005230001
7200000100005640001
7200000100005120002
7200000100005360001
18,21,22,24
7200000100002580001
625034
7200000100002630001
7200000100002630002
7-12,16,20,22,26
7200000100002630003
13ª
7200000100002630004
7200000100002340013
3900000100002110001
1,2,3,4,6
3900000100002110002
7000000300000120007
54,(74-999)
6100000100020340001
6100000100020340002
(99-117)
6100000100003750003
(1-799),(2-800)
6100000100022500001
6100000100028930001
6100000100019690001
6100000100023820001
6100000100019710001
6100000100023960001
6100000100023980001
6100000100029010001
6100000100023790001
6100000100022690001
6100000100019720001
6200000100007230001
6200000100006750001
4,7,12
6200000100007280001
6200000100007290001
6200000100007260001
2300000100003410004
(18-26),(43-51),35,39,39 ,(42-48)
8600001100000010001
628602
8603
71135000000
(17-23),52,54,56
8600001100000010002
(70-76),(55-59),(84-90)
8600001100000010003
628605
1-11,14 
8600001100000010004
628606
8600001100000980001
628616
8600001100000990001
8600001100000970001
628601
8600001100000020001
628621
8600001100001050001
8600001100002230001
8600001100000060001
8600001100001110001
8600001100001130001
628614
8600001100000090001
8600001100000100001
8600001100001170001
8600001100002390001
(6-22)
8600001100000140001
8600001100000140002
(24-30),(25-35),34,36
8600001100000140003
628624
8600001100000120001
8600001100000130001
628611
(15-21),(25-33),(2-8)
8600001100000130002
628615
8600001100001190001
(3-11),(6-16),13,13 ,15/12,29,31,35
8600001100000170001
27,39,47,51,55
8600001100000170002
13/12
8600001100000170003
8600001100000190001
8600001100001240001
1-21,(25-87),46,50,64,74,78,78 ,80,92
8600001100000210001
36,(82-88),91,91 ,92 ,96,(97-107)
8600001100000210002
(35-49),(17-19),(4-14),13
8600001100000220001
2£/3
8600001100000220002
2£/2,2£/1,2/3,2/2,2/1,2¡/3,2¡/2,2¡/1
8600001100000220003
8600001100000220004
(16-20),(51-59)
8600001100000220005
628617
(22-26),30,63,65
8600001100000220006
1/1,1/2,1/3,1/4,1/5,1/6,1/7,1/8
8600001100000220007
1£,2,2¡,2£,2¤,2/4,2¢
8600001100000220008
628609
8600001100001260001
8600001100001270001
1-2,4-5,7-8,(14-16)
8600001100000260001
3,6,9-13,17-999
8600001100000260002
8600001100000290001
17¯,26¡,15¯
8600001100002220001
8600001100000300001
67,7,5 ,9,11/3,9/1,13,11/2,11,9/3,9/2
8600001100000300002
7/2,7/1,3¡,3 ,3,1 ,1,64,5
8600001100000300003
8600001100000300004
14/2,11/1
8600001100000300005
(30-38),17/2,17/1,17,15
8600001100000300006
8600001100000310001
8600001100002730001
1-68,70,73-75,(78-84),89,93,93 ,116 
8600001100000380001
(121-133),(85-87),(143-155),105
8600001100000380002
(140-148),106,(93-95),101,(96-98),117
8600001100000380003
8600001100002370001
(2-32),(36-40),(3-13)
8600001100000150001
(2-12),1,7,11,13
8600001100000410001
(16-24),(29-31),19
8600001100000410002
8600001100000420001
(54-60),(26-40),(44-50),31
8600001100000430001
1,(3-7),(19-27),13,15
8600001100000430002
(62-70),(74-82),(81-85),63
8600001100000430003
37,55
8600001100000430004
8600001100001330001
1,2,3-6
8600001100000450001
2/1,(8-20)
8600001100000450002
8600001100002380001
(2-6),(18-22),10,14
8600001100000460001
(1-3),(21-41),(5-9)
8600001100000460002
(34-36),(43-53),(57-59),(63-67),68
8600001100000460003
1,(2-10),13
8600001100000470001
1-5,(14-24),(28-34)
8600001100000480001
(36-56),(64-68)
8600001100000480002
(70-82),(86-92),(85-93)
8600001100000480003
8600001100000480004
8600001100001430001
8600001100002400001
(1-9),(4-12),13,19
8600001100000500001
1,4,(8-20)
8600001100000540001
1 ,1¡,5-94
8600001100000560001
98,101,(104-112),111,111 ,115
8600001100000560002
9,(54-62)
8600001100000570001
64,66,68
8600001100000570002
8600001100000570003
8600001100000570004
8600001100000580001
8600001100000590001
8600001100001710001
8600001100002450001
1,8,9 ,10,20
8600001100000030001
8600001100000050001
8600001100002280001
4-100,103,104-140,145,150
8600001100000250001
5,8,10-17
8600001100000730001
8600001100002470001
7-8,13-14,20,22
8600001100000810001
8600001100000840001
8600001100000890001
8600001100000900001
8600001100000330001
8600001100000520001
8600001100000680001
5-98,1 ,1¡
8600001100000610001
8600001100000630001
(1-5),9,13,15,21-23,25,26,31,35,37
8600001100000630002
28 ,(32-38),(41-57)
8600001100000640001
(1-15),(21-33),12
8600001100000640002
8600001100000650001
8600001100001760001
8600001100000780001
8600001100000180001
8600001100000660001
19 
8600001100000660002
(18-28),17,17 ,19¡,(21-25)
8600001100000660003
8600001100000670001
8600001100001550001
8600001100001560001
8600001100001590001
8600001100001640001
(46-56),57,60,62,66,68
8600001100000700001
39,62 ,(70-84)
8600001100000700002
9,11,17,19
8600001100000700003
3-7,8,11/1,11/2,(12-24),40,28,28 
8600001100000700004
8600001100001660001
8600001100001670001
8600001100000710001
8600001100000740001
8600001100000750001
8600001100000750002
8600001100001780001
4,5,7,12
8600001100001830001
1£,1¢,2,45 ,61 ,62
8600001100001830002
1-30,32 
8600001100001840001
8600001100001840002
8600001100001860001
8600001100001870001
8600001100001880001
8600001100000760001
(5-13),(23-31),59
8600001100000760002
28,(32-40)
8600001100000760003
8600001100001900001
8600001100000790001
8600001100001940001
8600001100001960001
8600001100001980001
8600001100001990001
8600001100002080001
8600001100002090001
8600001100000820001
9,11,16,(15-21)
8600001100000830001
(23-29),(35-45)
8600001100000830002
8600001100002130001
8600001100000850001
8600001100000850002
24,26,34,36,38
8600001100000850003
(47-69),(75-87),91,93
8600001100000850004
15,15/1,15/2,18,(17-23),33
8600001100000850005
8600001100000870001
8600001100002190001
8600001100002480001
8600001100000880001
8600001100000220009
1-14,27-999
8600001100002220002
628600
8600001100000300007
8600001100000150002
8600001100000410003
8600001100000750003
8600001100000430005
8600001100000300008
1800000100002630001
2 ,(3-31)
1800000100000280001
1800000100000460003
1800000100002250009
5002100004700080001
142455
46239000000
5002100004700080002
1-158,186-188
5000901600200000001
143590
5017
46218822002
1-42,57,58
5000901600300000001
143532
46218822005
5000901600400000001
46218822006
1-6,13,19
5000901600500000001
46218822009
1-34,41,66
5000901600600000001
46218822007
5000900200200000001
46218822001
5000901600700000001
46218822003
5000901600700000002
5000901600700000003
5000901100100000001
143500
46218825006
1-78,81
5000900100400000001
46218825008
1-50,52,109
5000900100500000001
46218825009
5000901100400000001
46218825005
5000901100600000001
143521
46218825021
1-24,55
5000901100800000001
46218825016
5000901101100000001
46218825011
5000901101400000001
46218825025
1-30,62
5000901101600000001
143550
46218825022
5000901101700000001
143520
46218825003
5000901101900000001
46218825007
5000901102000000001
46218825024
5000901102100000001
143502
46218825017
1-60,70
5000901102500000001
46218825004
1,2
5000901100300000001
143540
46218825018
1-26,27 ,53
5000901100700000001
46218825012
1-62,67
5000900800100000001
143541
46218816007
1-18,28,40,44,65,71
5000900800200000001
46218816008
5000900800300010001
46218816002
5000900800300000001
5000900800400000001
46218816004
1-44,73
5000900800500000001
46218816013
5000900800700000001
46218816011
5000900800800000001
46218816005
5000900801000000001
46218816012
5000900801200000001
46218816001
1-61,100-103
5000900801300000001
46218816010
5000900801400000001
46218816003
1-111,121,137
5000900300100000001
143513
46218802002
1-14,38
5000900300200000001
143515
46218802003
5000900300400000001
46218802004
3-8,17,18,20
5000900300600000001
143514
46218802001
1-51,66,72,74,76
5000900301000000001
46218802007
5000900301500000001
46218802012
5000900301800000001
143516
46218802013
5000900302400000001
46218802019
1-22,27
5000900302600000001
46218802022
5000900302700000001
46218802023
1-49,55
5000900303000000001
46218802026
1-47,53 ,55
5000900303200000001
46218802030
1-15,24,29,31,37-41,49
5000900400100000001
143517
46218804011
5000900400200000001
46218804009
5000900401100000001
46218804016
1-6,14-81,145
5000900401500000001
46218804013
14¢,42,43
5000900401600000001
46218804005
5000900700100000001
143511
46218813001
5000900701700000001
143512
46218813020
1-98,102-283
5000900700200000001
46218813002
1-58,68-79
5000900700300000001
46218813003
3-101
5000900700400000001
46218813004
1-67,80-108
5000900701800000001
46218813017
2-60
5000900700500000001
46218813006
5000900700600000001
46218813005
5000900700700000001
46218813007
5000900700800000001
46218813008
2-34,39
5000900701900000001
46218813019
1-56,64
5000900700900000001
46218813009
5000900701000000001
46218813011
20-22,46
5000900702000000001
46218813022
2-86
5000900701100000001
46218813012
5000900701200000001
46218813013
5000900701300000001
46218813014
5000900701400000001
46218813015
5000900702200000001
46218813018
5000900702100000001
46218813021
5000900900300000001
143522
46218819003
5000900900400000001
46218819019
5000900900500000001
46218819008
1-24,95
5000900900800000001
46218819002
123,129,136,152
5000900900800000002
224,225,240,245
5000900900800000003
247,254,258,261,272,290
5000900900800000004
1-24,33
5000900901000000001
143523
46218819013
5000900901200000001
46218819009
1-54,55
5000900901300000001
46218819005
5000900902000000003
46218819004
5000901201900000001
143580
46218828014
1-7,17-25
5000901202100000001
46218828025
1-7,12-53
5000901200800000001
143570
46218828001
5000901300100000001
143581
46218831002
5000901300200000001
143582
46218831011
5000901300300000001
46218831004
5000901301000000001
46218831009
5000901301100000001
46218831005
1-201,230,250-259
5000901500800000001
143591
46218837008
5000901700100000001
143560
46218843017
2-16,23
5000901700300000001
46218843028
5000901700400000001
46218843005
1-63,112,134,237
5000901700900000001
46218843004
2-38,71
5000901701100000001
46218843001
5000901701200000001
46218843007
1-35,37
5000901702000000001
46218843023
1-10,161,186,243,269,349
5000901702200000001
143573
46218843025
401,402,405
5000901702200000002
1-96,103,106,114
5000901702800000001
46218843002
1600000100016270003
11,(27-37)
1600000100016270004
(1-152)
6100000100009560002
(48-112)
6100000100000780002
3800000300002740001
(134-176),(97-999),(182-998)
3900000100005230003
6600000100011360001
6600000100011360002
2-52
2400000100008560001
93-109
2400000100008560002
660077
2400000100001160001
15-44
2400000100001160002
4300000100001970004
(21-999),(50-192)
6100000100019930001
6100000100019930002
5200000100011230001
33 
5200000100011230002
603127
3403100100001980001
3403100100002500001
(1-79),(2-92)
3403100100002510001
(1-13),(4-10)
3403100100002520001
(15-65),(12-66)
3403100100002520002
5000003000000720003
5000003000000550003
5000901300700000001
46218831008
5000900900200000001
46218819022
5000900901600000001
46218819018
5000900401500000002
5500000100009280001
24ª2,26ª2,26ª3
5500000100009280002
(28-46),(9-19)
5500000100007390008
5500000100009260001
2,4,5,7-999
5500000100009260002
3501600015300010001
161380
3538
3515
19236802015
1800000100002050004
1800000100003450001
3 ,4 ,5 ,6 ,7 ,8 ,9 ,10 ,11 ,12 ,13 ,14 
1800000100003450002
3¡,8¡
1800000100003450003
72,74
3300300100000740001
601442
3303
17415000000
1-71,73,75-100
3300300100000740002
601441
13,15,21,23,25,27
3300300100000020001
601445
2,4,6,8,10,29,32,34
3300300100000020002
601443
11,13,15,17,18,12
3300300100000190001
3300300100000190002
1,3,5,7,9/1,9
3300300100002350001
3300300100002350002
1,3,5,7,9/1
3300300100002360001
1 ,9,11
3300300100002360002
3300300100001430001
53,53 ,55,57,59,32 ,38 ,40 ,44 
3300300100001430002
(1-499),(2-500)
6100000100028910001
6100000100029030001
7400000100010380002
454000
5301800000101310001
174580
5316
49245551000
2400000100004160001
(22-32),20£/3,(11-29)
2400000100004160002
2400000100003220001
(14-44),(3-19)
2400000100003220002
(37-95),(76-146)
6300000100012980002
(97-129),(148-176)
6300000100012980003
6300000100012980004
(131-227),(178-286)
6300000100012990001
(2-8),26
0200100100008110010
0200100100000200008
(97-301)
0200100100000200009
107,(111-301)
0200100100002280003
0200100100003460007
149ª2
0200100100004280022
1-4,9-11,14-16
0200100100011510005
0200100100009580015
0200100100009580016
18-300
0200100100006390003
1-4,6-8,10-300
0200100100006510003
0200100100006800001
0200100100008540001
0200100100008540002
35ª1,35ª2
0200100100008540003
37,39,41-300
0200100100008540005
0200100100004930003
0200100100004930004
0200100100008110001
3801500800000000001
665689
3847
3834
25226562000
5400000100001840008
(3-25),(2-26)
6400000100002700001
(27-999),(28-999)
6400000100002700002
(3-81),(2-4)
6400000100012640001
(83-999),(6-999)
6400000100012640002
0204200100001210007
147,149,151
0204200100000080004
0204200100001960006
0204200100001960007
0204200100004480001
0204200100004480002
0204200100004480003
0204200100003810001
0204200100003810002
0204200100001930001
0204200100001930002
0204200100001930003
0204200100001930004
0204200100002920001
0204200100002920002
453110
0204200100002920003
5002900022501200001
143132
5075
46249563000
2300000100006530003
2300000100006530004
53ª,53ª
2500000500001050005
2500000500001050006
2500000500001050007
2500000500001050008
2500000500001050009
2500000500001050010
2500000500001050011
28ª
2500000500001050013
19ª
0200100100006960003
7600000100007380004
78401000000
1,1,1
3300000100001570005
11,13
3300000100003440004
9,9,9,9,11
3300000100003440005
72,78
3300000100003950005
60,62,64,66,68,70
3300000100003950006
3,3
3300000100003100005
3,3,5,7,11,11
3300000100003950007
7001700003700000001
634507
7014
69254808026
(1-39),(2-998)
6600001600000960001
623104
6625
65480000000
6600001600000960002
623101
6601000100000720001
624380
6647
65212501000
6601000100000720002
624381
6601000100000070001
6601000100000070002
6601000100000360001
(49-999),(48-998)
6601000100000360002
6601000100000490001
(53-999),(50-998)
6601000100000490002
(1-77),(2-80)
6600002500000730001
623783
6602
65406000000
(79-999),(82-998)
6600002500000730002
623784
0200100100001840011
91,(93-117),(121-131),(92-122)
2400000100003660007
7800000000007840009
6600002200001120001
623412
6612
65436000000
(83-999),(84-998)
6600002200001120002
623430
6600002200001770001
623418
(71-999),(62-998)
6600002200001770002
623401
6600002200001930001
(39-999),(24-998)
6600002200001930002
623428
(1-23),(49-999)
6600002200002220001
(25-47),(2-998)
6600002200002220002
623417
6600002200002650001
6600002200002650002
623416
6600002200002930001
6600002200002930002
(1-19),(2-998)
6600002200003410001
623408
6600002200003410002
(1-999),(30-998)
6600002200003990001
6600002200003990002
6600002200000220001
(11-53),(10-50)
6600002200000220002
(55-999),(52-998)
6600002200000220003
5500000100007830001
5500000100007830002
2ª1
0200100100003670003
6100000100020590003
6100000100029160001
6100000100009160002
6100000100012950001
(80-94),(43-65)
6100000100000180003
6100000100004280002
(36-110),(35-117)
6100000100008510002
6100000100012760002
6200000100000280002
6200000100000290003
8600000200000070001
628481
8608
71183000000
8600000200000070002
628485
8600000200000070003
628486
8600000200000200001
8600000200000200002
8600000200000200003
628484
8600000200000190001
8600000200000190002
8600000200000190003
(15-51)
8600000200000300001
8600000200000300002
(28-58)
8600000200000190004
8600300002900000001
628148
8613
71112920001
7601000032900000001
78226825017
1-33,36 
7600100016000000001
78250875014
7600100027600010001
1-21,23,25,27-54,56,58,60,62,64
7601000022400010001
78226807028
7601000008200000001
78226807009
1-32,34,36,38,40,42,44,46,48,50,52
7601000027100010001
7601000034000010001
7601000021900070001
1,2,7
7601000021900080001
7601000034100000001
78226825014
7601000012100010001
1-6,7,9,11,13,15,17
7601000034200000001
78226830002
7601000034300000001
78226830005
7601000034400000001
78226830006
7601000034500000001
78226830008
1-24,25
7601000034600000001
78226830009
1-16,18,20,22,24,26,28,30,32
7601000015100000002
78226830011
7601000017400000002
78226830017
7601000034700000001
78226830018
1-16,18,20,22,24
7601000019000000001
78226830019
1,2 ,2¡,2,3-22,25,27
7601000030200000001
78226830025
7601000004900130001
7601000004900140001
7601000004900150001
7601000004900160001
7601000004900170001
7601000013800000001
78226807015
7601000033100000001
78226840015
1-6,27,40
7601000034900000001
152263
1-4,5 ,5,6-28,37
7601000013000020001
7601000013000050001
7601000000500000001
78226855003
7601000002900520001
7601000017800030001
1-15,18,20,22
7601000035100000001
78226860004
7601000035200000001
78226860008
7601000030500000001
1 ,1,2-11,12 ,12,13,14,15,17,19,21,23,25
7601000020400008000
78226895008
27,31,33,35,37,39,41,43,45,47,49,51,53
7601000020400000001
29,47 ,47¡,47¢,47£,47¤,55,57,59,61
7601000020400008001
7601000035300000001
78226825016
7601000035400000001
78226807034
1-11,13,15,17,19,21,23,25,27,29,30
7601000035500000001
78226807019
7601000035700000001
78226855021
7601000036000000001
78226811002
1,2,4-30,32
7601000036100000001
78226875004
7601000036200000001
78226816002
7600100009500070001
78250815000
7600100009500090001
7600100009500020001
7600100009500010001
1,3,5,7 ,7,11
7600100009500050001
7600100009500080001
5,7,9 ,11,13
7600100009500060001
7600100009500100001
2,6,7,9 
7600100009500030001
7600100009500040001
7600100060800000001
78250815016
7600100036000000001
78250815023
7600100049200000001
78250815030
7600100043500000001
78250815028
7600100048700000001
78250815029
7600100012500000001
78250815010
7600100019000000001
78250815013
7600100049900020001
78250815031
7600100049900010001
7600100049900030001
7600100049900040001
7600100049900050001
7600100049900060001
7600100042800000001
78250815027
7600100041600010001
7600100041600020001
7600100041600030001
7600100041600040001
7600100040500000001
78250815025
7600100033200000001
78250815019
7600100001900000001
78250815003
7600100012700000001
78250815011
7600100014800000001
78250815012
7600100025300000001
78250815015
7600100033500000001
7600100034200000001
78250815021
7600100060500000001
78250815022
7600100036800010001
78250892029
7600100036800020001
7600100056700000001
78250815034
7600100011300000001
78250815007
7600100022000000001
78250825002
7600100030300000001
78250815018
7600100029200000001
78250815017
7600100005100000001
78250815004
7600100055900000001
78250815032
7600100000400000001
78250815002
7600100025400060001
7600100025400020001
7600100025400030001
7600100025400050001
7600100025400040001
7600100025400010001
7600100041200000001
78250835017
7600100040300000001
78250835016
7600100007000000001
78250835004
7600100053500000001
78250835022
7600100018000000001
78250835009
7600100048400000001
78250835020
7600100042000000001
78250835018
7600100058400000001
78250835025
7600100007700000001
78250835006
7600100009400000001
78250835007
7600100019600000001
78250835010
7600100066700000001
7600100046900000001
78250835019
7600100003900000001
78250835002
7600100057700000001
78250835024
7600100033900000001
78250835015
7600100025600000001
78250835012
7600100026700000001
78250835013
7600100031200000001
78250835014
7600100016800000001
78250835008
7600100055000000001
78250835023
7600100051300010001
150512
78250890001
7600100051300020001
7600100051300100001
7600100051300080001
7600100051300030001
7600100051300050001
7600100051300090001
7600100051300150001
7600100051300060001
7600100051300070001
7600100051300130001
7600100051300120001
7600100051300040001
7600100051300140001
7600100051300110001
7600100061800000001
78250890012
7600100053300000001
150513
78250890029
7600100049700000001
78250890027
7600100007100000001
78250890005
7600100034600000001
78250890019
7600100045100000001
78250890025
7600100013400000001
78250890008
7600100066800000001
7600100012800000001
78250890007
7600100017000000001
78250890010
7600100022300000001
78250890014
7600100026600000001
78250890015
7600100033300000001
78250890018
7600100059500000001
78250890032
7600100059000000001
78250890031
7600100066900000001
7600100020900000001
78250890013
7600100044800000001
78250890024
7600100006700000001
78250890004
7600100029400000001
78250890016
7600100051700000001
78250890028
7600100039500000001
78250890022
7600100019300000001
78250890011
7600100036200000001
78250890020
7600100067100000001
7600100001400010001
7600100001400020001
7600100001400040001
7600100001400030001
7600100047100000001
78250890026
7600100067200000001
20,22,26,28
7600100059300010001
150505
78250880000
1-14,15-26,30-42,44,45,52
7600100059300000001
121-137
7600100051400010001
78250880022
7600100051400030001
138-171,172 
7600100051400050001
85-118
7600100051400040001
173-190
7600100051400060001
7600100003600000001
78250880002
7600100020700000001
78250880009
7600100031400000001
78250880013
7600100012100000001
78250880006
7600100018700000001
78250880008
7600100013600000001
78250880007
7600100053700000001
78250880026
7600100004800000001
78250880003
7600100026100000001
78250880011
7600100029600000001
78250880012
7600100037400000001
78250880015
7600100043400000001
78250880018
7600100048500000001
78250880020
7600100008100000001
78250880005
7600100052400010001
78250880023
7600100052400020001
1 ,1¡,1¢,1¤,2-19
7600100052400030001
7600100052400040001
7600100052400050001
7600100065500000001
7600100042100000001
78250880017
7600100053400000001
78250880025
7600100007900000001
78250880004
7600100024400000001
78250880010
7600100032600000001
78250880014
7600100040400000001
78250880016
7600100044600000001
78250880019
1 ,1,2-17
7600100058700000001
78250880027
1-16,18,20,22
7600100010700100001
7600100010700080001
7600100010700090001
7600100013800000001
78250870002
1-29,31,33,35,37,39
7600100019400000001
78250870005
7600100020000000001
78250870006
7600100024900010001
78250870007
1,3,4,5,7,9
7600100024900020001
7600100024900030001
3,4,6,8,10,14,16
7600100066100010001
78250870008
7600100066100020001
7600100025200000001
78250870009
1-23,25,27,29,31,33,35,37
7600100028700000001
78250870010
7600100034100010001
78250870012
7600100034100020001
7600100034100030001
7600100034900000001
78250870013
7600100037800000001
78250870014
1-10,12,14,16
7600100041400000001
78250870016
7600100039700000001
78250870015
7600100052200000001
78250870017
7600100053800000001
78250870018
7600100055200020001
150506
78250870020
7600100055200010001
1-25,27,29,31,33
7600100057100000001
78250870021
1-39,41,43,45,47
7600100057200000001
78250870022
1,2,3,5,6,7,8
7600100059100010001
78250870024
7600100059100020001
1,3,4,5 ,5,7 ,9 ,9,11 ,21-31,33,35
7600100031800010001
78250870000
1,2,3 ,3,4-9
7600100031800020001
1-5,8,10,11,13
7600100031800030001
7600100031800060001
7600100031800070001
1,3,5,7,8
7600100031800040001
7600100031800080001
7600100031800090001
7600100067300010001
1-9,11,13,15
7600100067300020001
7600100067300040001
7600100067300030001
1 ,1¡,1,2-17,19,21-25
7600100067300050001
7600100067300060001
7600100062700000001
2-10,12,16
7600100062800000001
1,3,5,7-11,13,14,16
7600100028600000001
1,2,4,6,7,8
7600100067400000001
3-7
7600100067500010001
1-17,19,20
7600100011600000001
78250892007
7600100017400000001
78250892012
7600100067600000001
3-8,11
7600100039200000001
7600100067700000001
7600100065100000001
7600100065300000001
7600100067800000001
7600100067900000001
7600100068000000001
1,1 ,2-39,41-53
7600100033000060001
1 ,2,3,5
7600100006000010001
78250830007
2,3,5,6,8-21,22 ,22,23 ,23,24-26,28,46 
7600100006000000001
1,3,6,7,9,10,11
7600100015200020001
78250830015
1 ,1,2-10,12-27,28 ,29-45,56
7600100015200000001
7600100045800020001
78250830032
1,5,7,17,18,20,22,24,26,28
7600100068200000001
1,2 ,2¡,2,3,4
7600100001000040001
1,2,3-16,17,18-22,24,25,27,29,31
7600100068300000001
7600100064700000001
1,2,3,4,6,7
7600100068400000001
1-26,28,30,32,34
7600100068500000001
7600100068600000001
7600100068700000001
7600100068800000001
53-83
7600100021100100002
7600100021100050001
7600100068900000001
5,7,8,9,19
7600100022600010001
7600100066000000001
78250895001
1-53,54-62
7600100050600000001
7600100069000000001
1,3,5,7,15,17
7600100069100000001
1-16,18,20,22-42,44,46,48,54
7600100069200000001
2-23,25,27,29,31,33,35,37,39,41,43,45-47
7600100028400000001
1,2,4,5-11
7600100069400000001
1-11,13 ,13,15,17,19
7600100069500000001
4-9,11-18,20,22,24,26,28,30,32
7600100053100000001
78250880024
41-49,51,53,55,57,59 
7600100024600140002
7600100024600250001
1-16,18-34,36,38,40,42,44,46,48,50,52,54
7600100024600020001
56,58,60,62,64,66,68,70,72 ,72¡,74,76,78
7600100024600020002
78 ,78¡,80,82,82 ,84,86,88,90,92,94,96
7600100024600020003
98,98 
7600100024600020004
7600100025900090001
1-13,15,20
7600100025900080001
1,4,10,10 ,12,14-19,21,24,26,28,30,32,34
7600100025900050001
35,36,36 ,38,38 ,40,40 ,42,44,46,47,48
7600100025900050002
49-58,60,61,63,65,67,71,73,75,77,79,81
7600100025900050003
83,85,87,89,91,93,95,99
7600100025900050004
7600100025900070001
1-7,8 ,8
7600100025900030001
1-14,20,22,23,24,26-29,31,32,33,35,37-39
7600100025900043941
16,17,41,43
7600100025900040001
7600100025900020001
7600100025900010001
1,3,5,7-40,41 ,41¡,42-73,74,74 ,76
7600100025900100001
1,3-10
7600100025900060001
7600100017200050001
78250840017
2,6,7
7600100017200030001
7600100017200020001
7600100017200010001
7600100017200040001
7600100017200060001
1-17,21-23
7600100000700000001
78250840002
7600100007800000001
78250840006
1,3-13,15-18
7600100011900000001
78250840010
1-8,10-16,18,19
7600100011400000001
78250840009
7600100032000000001
78250840028
1-41,44,46,48
7600100035000000001
78250840031
7600100051800000001
78250840039
1-39,40,42,44,46
7600100026900000001
7600100019900000001
78250840020
7600100023700000001
78250840023
7600100033700000001
78250840030
7600100047800000001
78250840035
7600100047700000001
78250840034
7600100029100000001
78250840026
7600100005000000001
78250840005
1,2,5,6,7,8
7600100054500000001
78250840042
7600100069600000001
1-35,37,39,41,45
7600100019100000001
78250840019
7600100025100000001
78250840024
7600100022900000001
78250840022
7600100049100000001
78250840036
7600100055500000001
78250840043
1-7,8,10-22
7600100069700000001
7600100057900000001
78250840044
1-25,27-36
7600100002200000001
78250840003
7600100010900000001
78250840008
1,3,6,8-13,15
7600100009900000001
78250840007
7600100013700000001
78250840014
7600100012900000001
78250840012
7600100033600000001
78250840029
7600100015300000001
78250840016
7600100017800000001
78250840018
7600100041300000001
78250840032
7600100057000020001
78250825000
7600100057000060001
1,3,4,5
7600100057000040001
7600100057000030001
7600100057000050001
3-30,32
7600100057000010001
1-13,15,17,19,21,23,25
7600100030400000001
78250825004
7600100039400000001
78250825007
7600100070000000001
1,2,4,6,8
7600100045500000001
78250825009
7600100034000000001
78250825005
7600100051100000001
78250825011
1-8,10,12,14,16
7600100034700000001
78250825006
1-3,5,6,8,10
7600100069900000001
7600100049800000001
78250840037
1-8,10,11,12
7600100070100000001
7600100048000000001
78250825010
7600100070200000001
7600100070300000001
1 ,1,2-6,10,11,14,15
7600100017900090001
78250855000
7600100017900070001
7600100017900040001
7600100017900030001
1-3,4 ,4,5,6 ,6¡,6,7 ,7,8,9
7600100017900080001
7600100001600000001
78250855002
7600100003200000001
78250855003
7600100004200000001
78250855005
7600100004400000001
78250855006
7600100008700000001
78250855007
7600100010300000001
78250855008
1-46,48-52,54-57,59,60-70
7600100016700000001
78250855009
7600100017500000001
78250855010
1,2,3 ,3,4 ,4,6-8,9,10 ,10,11 ,11,12,13 
7600100017600000001
78250855011
7600100019800060001
78250855012
1-6,8,9 ,10,11 ,11,12-16,17 ,17,18-20
7600100019800080001
1 ,2 ,1,2,3-10,16 ,16,17-22,25
7600100019800010001
33,35,37,39,88,90,92,94
7600100019800070001
1-11,12,12 ,45
7600100019800030001
7600100019800050001
7600100019800090001
7600100019800100001
7600100023100000001
7600100023400000001
78250855015
7600100027400000001
78250855016
1-28,30,32,33-44
7600100031100000001
78250855017
16,23,31,32,41
7600100034800000001
78250855018
5,8,11,12,15,26,30,34,36,44
7600100036500000001
78250855019
1,1 ,2-13,14 ,14,15-17,18 ,18,19-33,34 
7600100037900000001
78250855020
1 ,1,2,2 ,3-8,9-16,19,21-32,34,36,37 
7600100038200000001
78250855021
1-8,11-16
7600100042700000001
7600100070400000001
1-3,5-8,10,12,14,16,18,20,22,24
7600100043700000001
78250855023
1-23,24 ,25 ,25,26,28,30,32,34,36,38
7600100044700000001
78250855024
1 ,1,3,4,6,7,8
7600100044700010001
7600100049500000001
78250855025
7600100058000000001
78250855026
7600100045300010001
150508
78250805000
7600100045300020001
7600100070500000001
78250805002
7600100002500000001
7600100070600000001
78250805004
7600100004100000001
78250805005
7600100004700000001
78250805006
7600100004900000001
78250805007
1-10,11 ,11,12-39
7600100005600000001
78250805008
1-18,24,26,28
7600100006600000001
78250805009
7600100008000000001
78250805010
7600100010400000001
78250805011
7600100070700000001
78250805012
1,3,5,7,9,11,15-25,29-31
7600100011100000001
78250805013
7600100011800000001
78250805014
1,2,3,4,6,8-16,18,20,22,24,26
7600100012200000001
78250805015
7600100013000000001
78250805016
7600100070800000001
2-40
7600100016300000001
78250805019
7600100017100000001
78250805057
7600100018300000001
78250805020
7600100021000000001
78250805021
2,4,6,8,10,14
7600100023600000001
78250805024
2-18,24-38,42,44
7600100024300000001
78250805025
1-10,14
7600100026200000001
78250805026
7600100070900000001
7600100071000000001
7600100027900000001
78250805029
7600100029000000001
78250805030
7600100030700000001
78250805031
7600100032200000001
78250805033
7600100032700000001
78250805034
7600100032800000001
78250805035
7600100035100000001
78250805036
7600100037300000001
78250805037
1-9,11-30
7600100071100000001
78250805038
7600100038500000001
78250805039
1-10,14-26
7600100071200000001
78250805040
7600100040200000001
78250805041
1-13,19-21
7600100041500000001
78250805042
7600100041900000001
78250805043
7600100045000000001
78250805044
7600100047300000001
78250805046
7600100047900000001
78250805047
7600100048900000001
78250805048
7600100049600000001
78250805049
7600100050700000001
78250805050
7600100050900000001
78250805051
7600100051900000001
78250805052
7600100054300000001
78250805053
7600100056100000001
78250805056
7600100056100010001
7600100056100030001
7600100056100020001
3401800100002740004
3401800100000700004
2200000000100060001
658076
2291
01555000000
5400000200000270001
5400000200000270002
(1-37),(41-999),(2-998)
5400000200001150001
5400000200001150002
7800000000001310005
202,264
5900000100005460017
224,242,244,284
5900000100005460018
614500
5900000100011070003
5900000100011450004
87-93
5900001000001110001
57427800000
1-86,94-999
5900001000001110002
126
5900001000001300001
1-125,127-999
5900001000001300002
5900001000000280001
1-71,73-999
5900001000000280002
5900001000001610001
1-118,120-999
5900001000001610002
91
5900001000001740001
1-90,92-999
5900001000001740002
5900001000000130001
5900001000000130002
3501000001500000001
162033
19224868001
0300000100000760001
670034
0326
81401373000
6600000100000530001
6600000100000530002
620073
(1-999),(22-998)
6600000100000530003
24,27,28,29,30
2200000100001850001
31,31,33,33
2200000100001850002
(2-40),(1-25)
2206100000100720001
658390
2289
01259895001
(42-100),(27-101)
2206100000100720002
658391
6300000100007850004
6300000100001920004
4200000900001610003
650992
4200000900004090004
650991
12,20,22
6000000100000680003
1300200100000050001
431861
1322
1301
89203501000
1300200100000050002
431860
1300200100000130001
1300200100000130002
1300200100000130003
58-160
1300200100000130004
(110-154),(111-163),96 
1301800100000550001
431444
1324
89420000000
1 ,36,62£
1301800100000550002
431450
1-10,15,16,22
1301800100000180001
431440
137,139,142,144
1301800100000180002
19,21,23-96
1301800100000180003
1301800100000170001
132-180
1301800100000170002
431449
5,7,26-69,24,72-90
1301800100000250001
(2-20),(21-23),25
1301800100000250002
1-89,(91-117)
1301800100000300001
(90-118)
1301800100000300002
3-41,43
1301800100000600001
95,(68-96),(104-108),87,89,(99-131)
1301800100000600002
(145-151)
1301800100000600003
45-53,(55-85),42,44
1301800100000600004
(36-62),(68-74),19-31
1301800100000480001
(33-51),(69-73),15,77
1301800100000480002
4-7,9,12,16,64
1301800100000480003
92-114,116,117,1 
1301800100000680001
43,45-78,81-85,87
1301800100000680002
(2-8),(1-9),11-22,24,26,27-42,23,25,44
1301800100000680003
1-57,(59-69)
1301800100000440001
(102-116),118-145,(58-68)
1301800100000440002
70-101,(103-117)
1301800100000440003
33,37,39
1301800100000670001
(102-118)
1301800100000670002
431448
1-32,35,36,38,40-67,69,72-77
1301800100000670003
79,81,82,84,86-90,92-97,99
1301800100000670004
(101-149),175
1301800100000670005
1301800100000820001
1,1,1,1,2-51,53,55
1301800100000820002
431445
12,14,14,16,26,812
1301800100000850001
1301800100000850002
1-33,35,37,43-45,47,48
1301800100000930001
50,(55-63),36,38,41,51
1301800100000930002
(76-84),(92-118),120-152,86-91
1301800100000970001
115,119,93,97
1301800100000970002
1-75,(77-83)
1301800100000970003
2,7-13,19,(16-22),23
1301800100000960001
(26-42),296
1301800100000960002
38-49,(51-59)
1301800100001110001
1-18,20-25,27-37,39,71
1301800100001110002
9-11,14-20,24,97
1301800100001170001
1,100
1301800100001170002
431441
1301800100001170003
431443
1301800100001170004
43,1-15
1301800100001130001
43,43,50
1301800100001130002
74,75
1301800100001260001
1-53,54-58,60-70
1301800100001260002
(48-60),(74-78),80-119,121
1301800100001210001
123,53,59,61,70
1301800100001210002
69-71,(73-79)
1301800100001210003
1-44,68,70
1301800100001210004
1301800100001300001
(1-15),2,4,6,21,24-26,28-30,42-47
1301800100001300002
(49-63),56,58,68-122,(124-128)
1301800100001300003
1-28,(30-42)
1301800100001360001
33,42,35
1301800100001360002
1301800100001310001
3,4,8,9,11
1301800100001310002
4,6,15-47,91
1301800100000710001
(94-110),112-167,(169-177)
1301800100000710002
179,181
1301800100000710003
13,48-72,(73-89),78,93,99
1301800100000710004
1-600
7001700012200000001
634529
69254832002
7200000100001430003
625036
7200000100005200003
4,5,7,19,24,26,35,37,39
7200000100000790001
7200000100001130005
3801800200500000001
665930
25234508000
3801800200300000001
3802700002800000001
666026
25255802001
(67-85),(70-88)
3402100100000840001
3402100100000840002
3402100100000990001
(51-85),(54-88)
3402100100000990002
(29-137),(26-134)
3402100100000650002
(131-139),(116-144)
3402100100000830002
(1-45),(2-66)
3402100100000830001
(47-89),(68-114)
3402100100000830003
(17-133),(18-104)
3402100100000660002
3402100100000380001
(41-45),(34-38)
3402100100000380002
(135-259),(130-256)
3402100100000640002
(103-117),(136-146)
3402100100000070004
1604300100001180003
18
2303500006000020001
352113
03254825009
4300000100000520009
4300000100000920005
(13-57),(14-44)
4300000100000920006
4300000100000950001
(27-99),(40-100)
4300000100000950002
4300000100001030001
4300000100001030002
(63-87),(70-100)
4300000100001390007
4300000100001400005
(1-3),4,6
4300000100002260001
2,(8-20),(5-21)
4300000100002260002
4300000100002510001
41,63
4300000100002790001
4300000100002790002
(35-101),(38-100)
4300000100003060003
(21-39),(18-22)
4300000100003230009
1/1,1ª1
4300000100003310003
4300000100003730001
4300000100003730002
4300000100003940001
(1-99),(14-100)
4300000100003940002
(49-111),(58-96)
4300000100004400004
4300000100004860001
(31-99),(28-100)
4300000100004860002
4300000100004930001
(23-99),(42-100)
4300000100004930002
4300000100005890001
10-100
4300000100005890002
66,83,85,95
4300000100005910003
2¡,2¢,2£
5200000100007360004
603058
110,112,118,120,247,249
5200000100001460009
154-230
6100000100009560001
7-11
6100000100013300001
6-36
6100000100011260001
(1-799)
6100000100020010001
6700000300000250001
214006
6729
66401365000
37-51
6700000300000250002
214011
6700000300001400001
214032
54-72,9,9,10,10
6700000300001400002
214039
6700000300001170001
26,27-100
6700000300001170002
6700000300002490001
13-100
6700000300002490002
(2-54),(1-51)
6700000300002500001
214027
53,56-100,10
6700000300002500002
(1-97),(2-100),(104-198)
6700000300003210001
214005
6700000300005030001
1-27,
6700000300005030002
214012
6700000300005770001
(26-100),(39-100)
6700000300005770002
(1-3),(7-15),(2-8)
6700000300003150001
17-100,5,5
6700000300003150002
6700000300003160001
(7-100),(8-100)
6700000300003160002
200-300,102
6700000300003210002
214010
(1-55),22,24
6700000300004630001
2,2,8,8,10,12,14
6700000300004630002
7400000900000340001
5ª,30ª30
0200000500000080004
84ª
0200000500000130004
41ª
0200000500000340005
1ª126
0200000500000390004
0200000500000400003
70ª,56ª9,17ª,26ª,46ª
0200000500000510007
13ª32,37ª55,25ª
0200000500000520009
48ª42
0200000500000520012
55ª,59ª23
0200000500000520013
2ª10
0200000500000530005
28ª42
0200000500000650005
10ª38
0200000500000650006
10ª
0200000500000810008
31ª52
0200000500000860007
9ª20
0200000500000110006
8ª12,25ª,25ª,29ª16,44ª,14ª8,3ª14
0200000500000410005
1-125,127-227,229,231,233
6400000300001060001
412420
6438
63404000000
126,228,230,232,234-997
6400000300001060002
412423
1-20,21ª¢1,22
6400000300001140001
21ª¢2,21ª¢3,23,24-58,59-997
6400000300001140002
6400000300001610001
412421
6400000300001610002
(1-149),(2-162)
6400000300001550001
(151-999),(164-998)
6400000300001550002
1-74,76
6400000300000040001
75,77-998
6400000300000040002
(1-129),(2-100)
6400000300000140001
412425
(131-999),(102-998)
6400000300000140002
1,2,3,5,(4-26)
6400000300000240001
(7-999),(28-998)
6400000300000240002
30-997
6400000300000320001
6400000300000320002
(59-997),(68-998)
6400000300000480001
68 ,68¡,(1-57),(2-66)
6400000300000480002
6400000300000500001
60,84-997
6400000300000500002
(1-147),(2-170)
6400000300000530001
(149-999),(172-998)
6400000300000530002
6400000300000580001
6400000300000580002
6400000300000680001
6400000300000680002
6400000300000860001
6400000300000860002
(1-7),(11-15),(2-14)
6401600100000150001
412484
6415
63221501000
(17-997),9,(16-998)
6401600100000150002
412483
6401600100000160001
28-997
6401600100000160002
(1-147),(2-222)
6401600100000280001
(149-997),(224-998)
6401600100000280002
6401600100000340001
412481
(37-231),(2-238)
6401600100000340002
(233-997),(240-998)
6401600100000340003
6401600100000550001
5-998
6401600100000550002
6401600100001080001
6-13
6401600100001080002
(1-33),(43-997),(2-998)
6401600100000690001
6401600100000690002
6402000000100550001
412861
6419
63225551000
6402000000100550002
412860
3402000100000050001
404033
3418
18236501000
3402000100000200001
404032
(32-48),(33-37)
3402000100000200002
(1-85),(2-138)
3402000100000400001
3402000100000400002
(28-44),(47-73)
3402000100000540001
(1-45),(2-22)
3402000100000540002
(29-73),(30-72)
3402000100000610001
3402000100000610002
3402000100000640001
(73-89),(90-106)
3402000100000640002
(27-65),(30-68)
3402000100000660001
3402000100000660002
3402000100000680001
(37-53),(30-44)
3402000100000680002
(15-21),(18-22)
3402000100000730001
3402000100000730002
(126-158),(113-145),(175-219),96,98
3401100100001250007
(147-173),(102-118)
3401100100001250008
(61-97),(78-118)
3401100100000050005
3800000300006140001
7601000036300000001
78226807024
7601000010300000001
7601000036400000001
78226807004
1-5,7,8 ,8,9-11
7601000025200000001
78226802016
7600100022400000001
78250835011
7600100067300070001
7600100018400000002
1¢
7600100038600000004
7,23,24,25
7600100038600000005
18,19 ,19,20-38,39 ,39,40-46,47 ,47¡,47¢
7601000000100340003
7600100045300000001
1-20,24,26
7600100023500000001
78250805023
43,45,47,49
7601000033400000003
25 ,43 
7600100028400000002
1-12,13 ,13,14-27,28 ,28,29,31,33-48,49 
7600100024600510001
50-57,59,61,63,65,67,69,71
7600100024600510002
1-8,10,11,13-28
7600100012000000001
2900000400000150001
164509
2902
11430000000
11,13-18
2900000400000150002
164524
2900000400000380001
2900000400000380002
2900000400000470001
9-63
2900000400000470002
2900000400000570001
12-50
2900000400000570002
(3-11),(4-8)
2900000400000680001
2900000400000680002
(8-28),15,17
2900000400000080001
164504
2900000400000080002
164501
(38-58),(39-63)
2900000400000200001
(71-79),(62-70)
2900000400000200002
(5-37),(8-36)
2900000400000200003
164520
2900000400000290001
(36-48),(31-45)
2900000400000290002
164507
(42-62),(45-57)
2900000400000300001
2900000400000300002
2900000400000300003
2900000400000300004
164521
2900000400000300005
2900000400000310001
(90-100)
2900000400000310002
164512
2900000400000310003
164514
2900000400000310004
164515
(47-71),(54-70)
2900000400000310005
(3-27),(2-32)
2900000400000310006
(36-40),(39-45)
2900000400000310007
(97-117),(116-124)
2900000400000310008
164522
(72-88),(73-81)
2900000400000310009
164500
2900000400000500001
(69-83),(50-68)
2900000400000500002
(1-21),(14-16)
2900000400000500003
(49-67)
2900000400000500004
2900000400000550001
2900000400000550002
2900000400000550003
2900000400000550004
(42-48),(33-39)
2900000400000630001
(9-31),(8-40)
2900000400000630002
3,15,17,(4-10)
2900000400000110001
(24-56),19
2900000400000110002
39-66
2900000400000700001
2900000400000700002
(24-44),(39-59),(63-67)
2900000400000750001
2900000400000750002
2900000400000750003
(39-63),(40-96)
2900000400000530001
164502
(4-16),24
2900000400000530002
164505
2900000400000850001
2900000400000850002
2900000400000850003
164523
(69-89),76
2900000400000010001
(25-37),38,40
2900000400000010002
(27-45),(34-38)
2900000400000260001
(47-61),(46-48)
2900000400000260002
2900000400000260003
2900000400000260004
(12-32),(11-25)
2900000400000260005
2900000400000690001
2900000400000690002
2900000400000390001
49,85,89,91,(50-68)
2900000400000390002
13,(15-47),(24-46)
2900000400000390003
2900000400000220001
2900000400000220002
2900000400000710001
2900000400000710002
(9-31),(24-38)
2900000400000270001
2900000400000270002
2900000400000770001
2900000400000770002
(49-57),(56-68)
2900000400000770003
2900000400000860001
2900000400000860002
(102-130),(81-101)
2900000400000860003
(5-27),(20-50)
2900000400000040001
43,(53-59),(54-76)
2900000400000040002
(5-27),(2-24)
2900000400000160001
(26-46),(35-49)
2900000400000160002
2900000400000510001
(31-59),(22-26)
2900000400000510002
(7-17),(2-26)
2900000400000590001
(21-29),(30-36)
2900000400000590002
(3-43),(2-28)
2900000400000230001
(30-36),(49-51)
2900000400000230002
2900000400000660001
(98-118)
2900000400000660002
2900000300000080001
164900
2903
11415000000
29-39
2900000300000080002
164902
2900000300000280001
2900000300000280002
164901
2900000300000280003
2900000300000300001
28-50
2900000300000300002
2900000300000190001
41-45
2900000300000190002
164903
2900000300000060001
19-25
2900000300000060002
2900000300000110001
2900000300000110002
2900000300000070001
2900000300000180001
47-57
2900000300000180002
2900000300000170001
40-47
2900000300000170002
2900000300000230001
2900000300000230002
2900000300000160001
2900000300000160002
2900000300000160003
2900000300000160004
2900000300000070002
2900000300000070003
(2-10),(12-38),(42-48),(62-70)
2400000400000310001
662970
(1-3),(9-15),19,23
2400000400000330001
5,9,(11-15)
2400000400000320001
(4-20),(5-17)
2400000400000300001
(3-35),(2-22)
2400000400000020001
2400000400000140001
(2-6),(12-16),(22-24),(30-36)
2400000400000140002
(1-11),(19-23),(27-33),(41-45),49
2400000400000360001
662978
57,59,65,67,69,73,75,(91-123)
2400000400000360002
662980
(4-16),(20-30),(34-42)
2400000400000350001
52,56,(62-74),(78-84),(69-99)
2400000400000350002
80,73
5900000100008530003
7800000000013560003
21,22,(35-37)
7800000000018740001
7800000000018740002
(3-7),14,16
7800000000000690001
(9-13),(8-12),14
7800000000000690002
(2-66),(1-57)
7102400100000600001
1,14-39
7102400100000870004
7102400100000860001
7102400100000860002
7102400100001660001
7102400100001660002
7102400100001720006
75,77,79
7102400100001720007
7102400012100000001
70248820017
15,15 
7102400012100000002
7102400100001270001
7102400100001270002
(3-25),(2-12)
7102400100001720008
7102400100000290001
111-121
7102400100000290002
301249
1-6,7-10,12,14-16
7102400015200050001
7102400015200080001
3,4,5,19,21
7102400015200230001
35/2
6300000800008130001
,(1-19)
6300000100002430001
6300000100002430002
7600100009500110001
7600100000300000001
78250890002
7600100002300000001
78250840004
1,5-10,12,14,16
7600100035300030001
7600100071400000001
1-26,30
7600100071500000001
78250805054
58 ,58,59-66
7600100035700000003
1,3,4-27
7600100071600000001
7800000000010740004
(2-42),(1-51)
2700000100009280001
2700000100005680009
56,58
2700000100009280002
4300000100001540001
(8-100),(1-101)
4300000100001540002
155,155
3900000100004440004
5200000100009500001
5200000100009500002
603162
114,116,217,231
5200000100001460010
(270-998)
5400000100001030006
2200000100000940004
(86-130),(69-123)
2200000200000160001
658130
2201
01403000000
(2-84),(1-67)
2200000200000160002
658133
35,39,36 
2200000200000170001
(2-34),36,(1-33)
2200000200000170002
(56-130),(77-151)
2200000200000190001
(2-54),(1-75)
2200000200000190002
21 ,21¡,(25-113),(22-58)
2200000200000030001
(2-20),(1-21),23
2200000200000030002
(66-118),(69-95)
2200000200000220001
2200000200000220002
(52-98),(63-81)
2200000200000230001
(2-50),(1-61)
2200000200000230002
2200000200001550001
658131
(96-170),(93-131)
2200000200000010001
(2-94),(1-91)
2200000200000010002
(90-156),(85-151)
2200000200000250001
(2-88),(1-83)
2200000200000250002
2200000200001560001
(2-34),(11-75)
2200000200000630001
1,7,9,35
2200000200000630002
658137
(72-94),(69-103)
2200000200000640001
2200000200000640002
(76-104),(65-111)
2200000200000290001
(2-74),(1-63)
2200000200000290002
(2-82),(1-65)
2200000200001190001
658135
(100-144),(83-145)
2200000200000230003
(106-124),(113-123)
2200000200000290003
(96-152),(105-187)
2200000200000640003
(120-138),(97-117)
2200000200000220003
(132-184),(125-169)
2200000200000160003
(172-218),(133-187)
2200000200000010003
(158-210),(153-209)
2200000200000250003
2200000200000190003
9,9,(11-39)
2202700100000230003
(6-96)
2202700100000230004
2202700100000590001
2202700100000590002
1-400
7001700013000000001
634051
69254883004
0300700100000010001
671950
0318
0307
81221501000
3
2400001800002130001
4,4
2400001800002130002
2 ,2¡,2¢,7,11,13,(17-25)
2400001800001770001
2400001800000820001
3300400100000140001
601482
3313
17215501000
3300400100000140002
601481
1-65,67-90
3300400100000240001
601480
66,91-141
3300400100000240002
3300400100000280001
1-32,34-999
3300400100000280002
601483
1-38,40
3300400100000400001
39,41-999
3300400100000400002
3300400100000510001
37,39-999
3300400100000510002
1-39,41-999
3300400100000490001
3300400100000490002
3300400100000370001
19,21-999
3300400100000370002
3300400100000380001
3300400100000380002
3300400100000160001
8,10-999
3300400100000160002
3300400100000250001
3,5-999
3300400100000250002
3300400100000310001
3300400100000310002
3300400100000450001
3300400100000450002
1600000100005140001
1600000100005140002
5000900300600080001
5000900300600080002
5000900300700010001
46218802005
42,73
5000900301900010001
46218802017
5000900302800000001
46218802024
5000900400200000002
47-103,108-120
5000900800700000002
5000900801600000001
46218816009
5000900901400000001
46218819016
3-19
5000901200200000001
46218828010
69,74
5000901201700000001
46218828019
12 ,20,22,23,34,36,106,108,110,112
3200000100004480001
241018
3243
3212
15222842001
1-19,21,24-33,35,37-57,59,61,63-105,107
3200000100004480002
111,113-999
3200000100004480003
(2-800)
6100000100020010002
6100000100025100001
6100000100029300001
6100000100029530001
6100000100022330001
6100000100029090001
6100000100028960001
6100000100019700001
6100000100022120001
5400000100014670008
45,45,45,45
3400000200000170009
404100
2,(8-16)
3400000100007790001
4,(5-15)
3400000100007790002
3400300000100280001
(27-999),(2-998)
3400300000100190001
3400300000100110001
3400300000100110002
(31-49),(38-58)
3402000100000050002
1,2,4,6-999
3400300000100280002
(1-77),(2-32)
3403100100000010001
3403100100000250001
(83-141),(40-120)
3403100100000010002
(2-68),(1-15)
3403100100002590001
(70-146),(17-81)
3403100100002590002
(83-147),148
3403100100002590003
16,18,22
3403100100001570001
403117
3403100100001570002
(17-93),(20-114)
3403100100001610002
(19-61),(18-34)
3403100100002060002
(19-59),(28-72)
3403100100000120002
(13-19),(16-20)
3403100100000250002
3403100100002540001
3403100100002540003
(5-13),1 
3403100100002540004
(35-59),(34-50)
3403100100000410002
(29-81),(40-94)
3403100100000530002
(25-69),(22-64)
3403100100002500002
3403100100000610001
(19-25),(24-30)
3403100100000610002
(27-39),(34-46)
3403100100000610003
3403100100000710001
(23-43),(30-56)
3403100100000710002
(23-101),(22-90)
3403100100000820002
3403100100000820001
(15-83),(20-86)
3403100100000840001
3403100100000840002
3,(2-34)
3403100100000930001
(11-75),(36-120)
3403100100000930002
45,(28-40)
3403100100000990002
(125-153),(128-158)
3403100100001450003
(151-155),(146-168)
3403100100001510003
(1-33),(2-4),6
3403100100002670001
(8-14),20
3403100100002670002
3403100100002670003
6 ,16,18,222
3403100100002670004
(133-157),(132-154)
3403100100001650003
(31-55),(10-36)
3403100100001670002
3403100100001890001
(9-87),(8-110)
3403100100001890003
(131-151),(150-154)
3403100100001900004
(124-148)
3403100100001900005
3403100100001940001
(59-63),48
3403100100002160002
(75-85),(58-60)
3403100100002240002
3403100100001830001
(15-21),(18-28)
3403100100001830002
3403100100002680001
3402100100000700003
(81-169),(94-184)
3403100100002510003
(3-45),(2-66)
3402100100000830004
3400000100029600001
(122-124),(132-144),(154-156),160,164
3400000100029520001
3400000100030030001
400016
(8-16),(7-17)
3400000100003320001
(1-11),16
3400000100004160001
19,19¤,21,23
3400000100026400001
(1-55),(2-70)
3400000100010270001
3401500100000050001
3401500100000050002
6400000500000080001
(57-999),(40-998)
6400000500000080002
6400000500003000001
6400000500003000002
6000000100000140001
2,4,8,10,14,(1-17)
6000000100000140002
180025
6000000100000590001
6000000100000590002
64,66,67,69,(75-81)
6000000100000900004
6000000100002520001
(22-26),(30-48)
6000000100002520002
5502800100001890001
(42-80),(43-89)
5502800100001890002
31,30
2900000100005320001
163053
2900000100003170004
163071
2900000100003170005
56-100
2900000100003170006
(13-99),(30-100)
2900000100002010003
1-4,10,12,14-100
2900000100005860003
(2-34),23,25
2900000100004660003
(35-45),(28-42)
2900000100000640001
2900000100000640002
(35-55),40
2900000100000740003
(30-34),65
2900000100000740004
163065
2900000100000760003
(101-107),(114-118)
2900000100000760004
2900000100004870001
163020
(51-83),(40-72)
2900000100004870002
163013
2900600100000880001
164111
2918
2911
11218501000
4700504304600000001
4700505600500000001
4700508201800000001
4700505900200000001
4700506700400000001
4700505000300000001
4700508200800000001
4700506700200000001
4700506900200000001
4700507000200000001
41212820006
4700500013900000001
4700500003600000001
41212802002
4700504700300000001
4700507300600000001
4700505000200000001
4700505500200000001
4700500012500030001
4700500100500000001
4700507300800000001
4700507301400000001
4700507500700000001
4700508202300000001
4700505200500000001
4700505200400000001
4700505200700000001
4700505200800000001
4700505200900000001
3300000100002140010
5002200003100000001
143080
5032
46241870008
5002200007300000001
143005
46241837008
5002200012900000001
143025
46241852004
5002200018600000001
46241852005
5002200005900000001
143082
46241804003
51-53,55,57-999
5800000100006480003
1-7,9,11,13,15,17,19,21,23,25,27,29,31
7601000033900010001
5003500100000460001
141900
5010
5078
46254501000
5003500100000460002
141901
5003500100000270001
5003500100000270002
58,60,62
3200000100004480004
3301100100000360004
(2-24),(3-7)
3301100100001000002
7400000900005400001
7400000900005390001
7400000100008610001
7400000100008610002
1600000100003710005
3601700003500270001
396335
20225881001
3601700003500270002
396336
0200100100005160001
0200100100005160002
5200000100005650011
1,2,4,6,7,8,11,13
1300000100000120001
3,5,9,10,12,14,15,17
1300000100000120002
(137-143),144,161
1300000100001710008
1-7,(11-15),9
1300000100000710001
(10-16),17-56,8
1300000100000710002
6,6,7,7,7/1,7/2,8,11,(10-14)
5600000100010660002
(107-151),(94-142)
5600000100000950002
5600000100010520001
5600000100010520002
5600000100010520003
5600000100010520004
5600000100005530001
5600000100020470002
5600000100020470003
1-108
5604300000100130001
462830
5635
5619
53204801001
109-136
5604300000100130002
462831
39-43
5604300000100160001
5604300000100160002
9,11,14,18
5604300000100170001
5604300000100170002
5604300000100310001
5604300000100310002
1-188
5604300000100270001
189-195
5604300000100270002
230-249
5604300000100270003
5604300000100340001
5604300000100340002
5604300000100380001
5604300000100380002
5500000100004970003
644011
7800000500000220001
(7-43),(14-66)
7800000500000220002
197761
7800000000006570006
7800000000006570007
(3-9),(2-18)
7800000500000450001
(31-45),(22-46)
7800000500000450002
(1-33),(2-96)
3602100001200070001
396440
20233812001
98-176
3602100001200070002
396441
3602100002800260001
85-115
3602100002800260002
6800000500000750009
6800000500000750010
6800000500000750011
6500000100000070003
(25-39),(82-999),(65-999)
6500000100000620003
174 ,109
6500000100000770004
1,(5-999),(2-999)
6500000100000960001
6500000100000960002
693014
6500000100005050001
(118-120),105
6500000100005050002
6500000100005050003
6500000100004280001
(41-81),85
6500000100004280002
83 ,103,198,(135-139)
6500000100004280003
78,(160-174)
6500000100004280004
2,4,6,22,24,30,(1-13)
6500000100001410001
6500000100001410002
2,4,52,1,7
6500000100001860001
(6-50),(54-999),3,5,(9-999)
6500000100001860002
14,(16-28)
6500000100002130004
6500000100002440003
6,8,10,22,22 ,11,17,19,27,17 
6500000100003750001
(34-144),(31-147)
6500000100003750002
146,148,(153-999)
6500000100003750003
6,4
6500000100000070004
6500000100000090003
6500000100001430003
198,196,(123-131),218 ,172
6500000100001500006
33,39,47,49,56,57,59,65,79,83
7400000100002160007
13,15,17,21
2500000100002330001
(1-7),
2500000100002330002
4200001200012090001
4200001200012090002
1-24,29-999
5200000100010060001
25-28
5200000100010060002
3 ,60,86
3400000100020000005
92¡
3400000100006180012
2900000100000470001
163059
2900000100000540001
163022
2900000100000540002
2900000100000690001
163001
42,42 
2900000100000690002
2900000100000760005
2900000100000980001
2900000100000980002
2900000100000990001
(49-59),61ª1,63,(42-52),36,54ª1
2900000100000990002
(2-34),54
2900000100000990003
2900000100001110001
(109-999),(100-998)
2900000100001110002
3,(4-14)
2900000100000130001
2900000100000130002
2900000100001130003
(25-29),24
2900000100001230003
2900000100001330001
163035
(41-999),39ª1,(6-14),60
2900000100001330002
163050
103,102
2900000100001580001
(2-24),11
2900000100001590001
163012
(27-999),(44-998)
2900000100001590002
(1-49),(2-46)
2900000100001630001
51,54
2900000100001630002
2900000100001800001
,(2-4),(12-998)
2900000100001800002
2900000100002150001
(37-43),40
2900000100002150002
2900000100006340001
(7-15),29,(6-24)
2900000100002330001
(1-23),(6-18)
2900000100002340001
(55-143),(28-58)
2900000100002340002
(159-247),(234-236),62,64,251,244
2900000100002340003
(265-285),(262-306)
2900000100002340004
(311-355),(312-350)
2900000100002340005
(357-999),(352-998)
2900000100002340006
163016
,(2-16),(20-998)
2900000100002530001
2900000100002530002
(1-31),(4-24)
2900000100002540001
(33-51),(68-78)
2900000100002540002
26,80
2900000100002540003
(49-247),(58-222)
2900000100002580001
2900000100002580002
(249-285),(224-270)
2900000100002580003
(287-999),(272-998)
2900000100002580004
(1-23),(2-54)
2900000100002680001
163021
(7-13),(12-14)
2900000100002690001
(25-999),(56-998)
2900000100002680002
163064
2900000100003000001
1,3,14,16
2900000100003030001
2900000100003030002
1,3,5ª1,9,11,13
2900000100003260001
2900000100003260002
(176-186)
2900000100003300001
2900000100003300002
(33-183),(36-174)
2900000100003300003
2900000100003390001
2900000100003390002
(11-71),(24-58)
2900000100003390003
(91-97),(60-74)
2900000100003390004
2900000100003390005
(119-999),(96-998)
2900000100003390006
2900000100003430001
2900000100003450001
2900000100003450002
163025
2900000100003550001
2900000100003550002
2900000100003640001
2900000100003640002
2900000100003870001
(23-43),(28-62)
2900000100003870002
(45-999),(86-998)
2900000100003870003
2900000100003890001
2900000100003890002
2900000100003970001
(85-999),(72-998)
2900000100003970002
2900000100003980001
(45-999),(38-998)
2900000100003980002
2900000100004240001
16ª3,18ª3
2900000100004560001
163018
(1-51),(21-40),(2-20)
2900000100004560002
(53-999),(42-998)
2900000100004560003
(1-167),(26-88),(116-124)
2900000100004530001
(171-183),(170-180)
2900000100004530002
(146-154),169,126
2900000100004530003
(90-114)
2900000100004530004
(189-999),(188-998)
2900000100004530005
2900000100003090001
(23-111),(32-114)
2900000100003090002
(115-123),125 ,(116-120)
2900000100003090003
(127-999),(122-998)
2900000100003090004
2900000100005060001
24,26,26ª1
2900000100005060002
(1-19),4,4ª1,4ª2,(6-22)
2900000100005060003
45,47,32
2900000100005210002
2900000100005380003
37,39,41,38,42
2900000100005440001
109,109ª1,108,108ª1,110ª1,112
2900000100005450001
(119-145),(138-186)
2900000100005550001
(147-999),(188-998)
2900000100005550003
2900000100005670001
(43-999),(50-998)
2900000100005670002
(3-29),16,28,32
2900000100005780001
(33-999),(36-998)
2900000100005780002
2900000100005800001
(1-17),(8-32)
2900000100005950001
2900000100005950002
(1-43),(2-32),45ª1
2900000100006130001
(55-999),(42-998)
2900000100006130002
(105-117),(76-94)
2900000100003390007
(35-99),(12-98)
2900000100003000003
5500000100000590001
5500000100000590002
5500000100000590003
287,287ª14
5500000100001210006
(46-74),75
5500000100001600003
5500000100003350005
9-52
5000900301100010001
46218802008
5000900301700010001
46218802015
5000900302800010001
5000900303100010001
46218802027
(66-70),(74-82),(61-73)
6400000100007220005
(127-181),(128-224)
6400000100017650010
6400000100010300010
6400000100009450003
101,107
6400000100008830005
33,33
6400000100000560004
(2-116),(1-85)
6101100000100060001
347661
6187
6109
60215817001
6101100000100240001
(1-77),(2-176)
6101100000100350001
6101100000101060001
(1-171),(2-200)
6101100000100400001
(1-167),(1-168)
6101100000100630001
(1-16)
6101100000101020001
6101100000100700001
6101100000100330001
6101100000100300001
6101100000100450001
6101100000100640001
6101100000100200001
(93-150),144
6101100000101000001
347662
6101100000101230001
347663
(63-999),(68-999)
6101100000100140001
347664
(155-999),(154-999)
6101100000100540001
(133-999),96
6101100000100600001
6101100000100150001
(115-999),144
6101100000100610001
(139-999),124
6101100000100500001
(173-999),202
6101100000100400002
(177-999),(178-999)
6101100000100350002
(169-999),(170-999)
6101100000100630002
(1-73),(2-76)
6101100000101000002
6101100000100640002
6101100000100800001
(120-999)
6101100000100060002
5500000100005400005
22,22ª1
5500000100005400006
1-46,48,50,61
5500000100006310001
47,49
5500000100006310002
25,25,25ª1,25
5500000100006360003
65,71,77
5500000100007240003
5500000100009320004
5500000100009320005
5500000100009680003
5500000100009970001
5500000100009970002
141,151,155
5500000100011240003
194,196
5500000100013590005
6,24
5500000100011480003
1,1áâà2,1ª2,1ª3,2áâà1,3ª1,3ª1áâà1,6ª1
7700000000000010001
111674
7721
45290574000
6ª1áâà1,7,8ª1,9ª1,9ª2,9ª2áâà1,9ª3,9ª5
7700000000000010002
10,10ª2,10ª2áâà1,10ª2áâà2,10ª2áâà3
7700000000000010003
10ª2áâà4,10ª2áâà5,10,11,11áâà2,12ª1
7700000000000010004
12ª1áâà1,12ª1áâà2,12ª2,13ª2,13ª2áâà1
7700000000000010005
13ª2áâà2,14áâà3,15ª1,15ª1áâà1,15ª2
7700000000000010006
15ª2áâà2,16,16áâà1,16ª1,17ª1,18ª1,18ª2
7700000000000010007
18ª2áâà1,18ª2áâà2,18ª3,18ª4,19,20áâà1
7700000000000010008
20áâà3,20ª2,22,22ª1,22ª2,22ª2áâà2
7700000000000010009
23áâà1,23áâà2,23áâà3,23áâà4,23áâà5
7700000000000010010
23áâà6,23áâà7,23áâà8,24áâà1,24ª1
7700000000000010011
24ª1áâà1,24ª1áâà2,24ª1áâà3,24ª4,26,26
7700000000000010012
31,31áâà1,31áâà2,32ª1,32ª1áâà1,33áâà1
7700000000000010013
33áâà2,33áâà3,33áâà3,33áâà4,33áâà6
7700000000000010014
33áâà7,33áâà8,33áâà11,33áâà13,33áâà14
7700000000000010015
33áâà15,33áâà17,33áâà18,33áâà19,35áâà1
7700000000000010016
37áâà3,37áâà4,37áâà5,45,45áâà1,45áâà2
7700000000000010017
45áâà3,45áâà4,45áâà5,45áâà6,45áâà7
7700000000000010018
45áâà8,45áâà9,47áâà1
7700000000000010019
19
7700000000000020002
109316
1ª2,1ª3,2,3áâà1,3áâà2,3áâà3,3áâà4
7700000000000020001
3áâà12,3áâà13,3áâà14,3áâà15,3áâà16
7700000000000020004
3áâà17,3áâà18,3áâà19,3áâà20,4,4ª1,4ª2
7700000000000020005
5ª3,6,6áâà1,9áâà1,9áâà2,11áâà1,11áâà4
7700000000000020006
11áâà5,11áâà6,11áâà7,11áâà8,11ª1,11ª3
7700000000000020007
11ª4,11ª5áâà1,11ª5áâà2,11ª5áâà3,13ª1
7700000000000020008
13ª2,13ª2áâà1,13ª2áâà2,13ª2áâà3,15ª1
7700000000000020009
15ª2,16áâà1,16ª2,16ª3,17ª1,17ª1áâà2
7700000000000020010
17ª2áâà1,17ª2áâà4,17ª2áâà5,17ª2áâà6
7700000000000020011
17ª3áâà1,17ª3áâà2,17áâà1,17áâà2
7700000000000020012
17áâà3,17áâà4,17áâà5,17áâà6
7700000000000020013
17áâà7,19,19áâà1,19áâà2,19áâà3,19áâà4
7700000000000020014
19áâà5,19áâà6,19áâà7,19áâà8,19áâà9
7700000000000020015
19áâà10,19áâà11,19áâà12,20,20ª2,21
7700000000000020016
22ª1,22ª2,24,24áâà1,26,28,30áâà1
7700000000000020017
30áâà1,30áâà2,30áâà2,30áâà3,30áâà3
7700000000000020018
30áâà3,30áâà3,30áâà3,30áâà4,30áâà4
7700000000000020019
30áâà5,30áâà5,30áâà5,30áâà6,30áâà6
7700000000000020020
30áâà7,30áâà7,30áâà8,30áâà8,30áâà9
7700000000000020021
30áâà9,30áâà10,30áâà11,30áâà11
7700000000000020022
30áâà12,30áâà12,30áâà13,30áâà13
7700000000000020023
30áâà14,30áâà14,30áâà15,30áâà15
7700000000000020024
30áâà15,30áâà15,30áâà16,30áâà16
7700000000000020025
30áâà17,30áâà18,30áâà18,30áâà19
7700000000000020026
30áâà19,30áâà20,30áâà20,30áâà21
7700000000000020027
30áâà21,30áâà22,30áâà22,30áâà23
7700000000000020028
30áâà23,30áâà24,30áâà24,30áâà24
7700000000000020029
30áâà25,30áâà25,30áâà26,30áâà26
7700000000000020030
30áâà27,30áâà27,30áâà28,30áâà28
7700000000000020031
30áâà28,30áâà29,30áâà29,30áâà30
7700000000000020032
30áâà30,30áâà31,30áâà31,30áâà32
7700000000000020033
30áâà32,30áâà33,30áâà33,30áâà34
7700000000000020034
30áâà35,30áâà35,30áâà36,30áâà37
7700000000000020035
30áâà38,30áâà39,30áâà40,30áâà41
7700000000000020036
30áâà42,30áâà43,30áâà45,30áâà46
7700000000000020037
30áâà49,30áâà49,30áâà50,30áâà51
7700000000000020038
30áâà51,30áâà52,30áâà53,30áâà53
7700000000000020039
30áâà54,30áâà55,30áâà56,30áâà56
7700000000000020040
30áâà56,30áâà56,30áâà56,30áâà56
7700000000000020041
30áâà57,30áâà58,30áâà59,30áâà60
7700000000000020042
30áâà60,30áâà60,30áâà60,30áâà61
7700000000000020043
30áâà62,30áâà64,30áâà67,30áâà68
7700000000000020044
30áâà69,30áâà70,30áâà71,30áâà72
7700000000000020045
30áâà73,30áâà74,30áâà75,30áâà76
7700000000000020046
30áâà77,30áâà78,30áâà79,30áâà80
7700000000000020047
30áâà80,30áâà80,30áâà81,30áâà82
7700000000000020048
30áâà82,30áâà82,30áâà82,30áâà83
7700000000000020049
30áâà84,30áâà85,30áâà86,30áâà87
7700000000000020050
30áâà89,30áâà90,30áâà91,30áâà92
7700000000000020051
30áâà93,30áâà94,30áâà95,30áâà96
7700000000000020052
30áâà97,30áâà98,30áâà99,30áâà100
7700000000000020053
30áâà113,30áâà115,30áâà169,30áâà301
7700000000000020054
30áâà1,32ª5áâà1,32ª5áâà2,32ª5áâà3
7700000000000020055
32ª5áâà4,32ª5áâà5,32ª5áâà6,34,34áâà1
7700000000000020056
34áâà2,34áâà4,34áâà5,34áâà6,34áâà7
7700000000000020057
34áâà8,34áâà9,34áâà10,34áâà11,34áâà12
7700000000000020058
34áâà13,34áâà14,34áâà15,34áâà16
7700000000000020059
34áâà17,34áâà18,34áâà19,34áâà20
7700000000000020060
34áâà21,34áâà22,34áâà23,34áâà24
7700000000000020061
34áâà25,34áâà26,34áâà27,34áâà28
7700000000000020062
34áâà29,34áâà30,34áâà31,34áâà32
7700000000000020063
34áâà33,34áâà34,34áâà36,34áâà37
7700000000000020064
34áâà38,34áâà39,34áâà40,34ª1áâà1
7700000000000020065
34ª1áâà2,34ª1áâà3,34ª1áâà4,34ª1áâà5
7700000000000020066
34ª1áâà6,34ª1áâà7,34ª1áâà10,34ª1áâà11
7700000000000020067
34ª1áâà14,34ª1áâà16,34ª1áâà17
7700000000000020068
34ª1áâà18,34ª1áâà19,34ª1áâà30
7700000000000020069
3áâà5,3áâà6,3áâà7,3áâà9,3áâà10,3áâà11
7700000000000020003
3,3áâà2,5,5áâà2,5,5áâà2,7
7700000000000030001
109456
45290586000
4ª1,4ª2,4,6ª1,6ª2,6ª3,6ª4,6ª5
7700000000000030002
109542
45290554000
2,7,9,11,13,13áâà7,14,15,16,17,18,19
7700000000000040001
109153
21_21áâà1,24_25,26,27,29,30_31
7700000000000040002
1,15,16,17,19,21,22,24,25ª1,25ª2,26,27
7700000000000050001
109428
29,31,33,33ª2,35,37,37,39,41,46ª1
7700000000000050002
46ª1áâà2,46ª2,47ª1,47ª2,48áâà1,49ª1
7700000000000050003
51ª1,51ª1áâà2,51ª2,51ª2áâà3,53,55,56
7700000000000050004
56,58ª1,58ª2,60,64,64áâà2,66,70
7700000000000050005
3áâà1,3áâà2,3áâà3,4
7700000000000060001
4,5,5áâà2,7,9áâà2,9áâà1,9áâà1,10,12
7700000000000070001
14,16,16,18,18áâà4,20ª1
7700000000000070002
1áâà1,2,3,3áâà1,3áâà2,3áâà3,3áâà4,4
7700000000000080001
109462
45290562000
6ª1,7ª1,7ª2,7ª3,7ª3áâà2,7ª3áâà3,7ª4
7700000000000080002
7ª5,7ª5áâà2,7ª6,8,9ª1,9ª2,9ª3,9ª3áâà5
7700000000000080003
9ª4,9ª5,10,10ª2,10ª2áâà1,11ª1,11ª2
7700000000000080004
11ª3,11ª4,12,13ª1,13ª2,13ª3,13ª3áâà2
7700000000000080005
14,14ª2,17,18/50,18/50áâà2,22ª1,22ª2
7700000000000080006
24,26ª1áâà1,26ª1áâà2,26ª1áâà3,26ª1áâà4
7700000000000080007
26ª1áâà6,28áâà1,28áâà2,28áâà3,28áâà4
7700000000000080008
28áâà5,28áâà7,30,30ª2
7700000000000080009
3,3áâà1,3áâà2,3áâà3,3ª1,5,6,7,8áâà2
7700000000000090001
8ª1,8ª2,9,10ª1,10ª2,10ª2áâà2,11áâà1,12
7700000000000090002
12ª2,12ª2áâà1,12ª2áâà2,13,13,14ª2
7700000000000090003
14ª3,16ª1,16ª2,16ª2áâà3,17,18ª1,18ª2
7700000000000090004
19,20ª1,20ª2,20ª3,22,26áâà2,28áâà1
7700000000000090005
28áâà2
7700000000000090006
29,33,35ª1,35ª2,35ª2áâà2,37,39,41
7700000000000100001
109129
7723
45290590000
16,18ª1,18ª2,18ª2áâà2,20/2,22,24,26,26ª1
7700000000000100002
109263
3,3áâà2,5,6,7,7áâà2,8,9áâà1,9áâà2
7700000000000100003
109390
10/15ª1,10/15ª2,10/15ª2áâà2,12,12ª1
7700000000000100004
12ª1áâà1,12áâà1,14/16ª1,14/16ª2,25
7700000000000100005
27/14
7700000000000100006
82,84,86,88,90,92,94,94áâà2,94ª3áâà1
7700000000000100007
109439
94ª3áâà2,95ª2,95/13ª1,96,96ª1,96ª1áâà1
7700000000000100008
97ª1,97ª2,97ª3,97ª4,98,99,100,101
7700000000000100009
101ª2,101ª2áâà3,101ª3,102,103ª1,103ª2
7700000000000100010
103ª3,104,104áâà1,105ª1,105ª2,107ª1
7700000000000100011
107ª2,107ª3,108,108áâà1,109ª1,109ª2
7700000000000100012
111ª1,111ª2,111ª3,113ª1,113ª2
7700000000000100013
113ª2áâà2,113ª3,113ª4,113ª5,115
7700000000000100014
115áâà2,117ª1áâà1,117ª1áâà2,117ª2
7700000000000100015
117ª3,117ª4,119,121ª1,121ª2,121ª3
7700000000000100016
121ª4,121ª5,123,125áâà1,125ª1
7700000000000100017
52,54áâà3,54ª1,54ª2,56,58,60,62,64
7700000000000100018
109443
65/47ª1,65/47ª2,66,66ª2,66,66,67ª1
7700000000000100019
67ª2,67ª2áâà2,68,68ª1,69,70,71ª1
7700000000000100020
71ª1áâà5,71ª2,71ª3,72,73ª1,73ª2,73ª3
7700000000000100021
73ª4,74,74áâà2,75ª1,75ª2,75ª3,76,77ª1
7700000000000100022
77ª2,77ª3,77ª3áâà2,78,79ª1,79ª2,79ª3
7700000000000100023
79ª3áâà2,79ª4,79ª5,79ª6,81,83ª1,83ª2
7700000000000100024
83ª2áâà1,83ª3,83ª4,83ª4áâà2,85ª1,85ª2
7700000000000100025
85ª5,85ª5áâà2,87áâà1,87áâà2,89ª1,91ª1
7700000000000100026
91ª2
7700000000000100027
28ª2,28/35,30,32,32áâà1,34,36,38,40ª1
7700000000000100028
40ª2,40ª3,40ª4,42,42áâà1,43áâà3,43/33
7700000000000100029
43/33áâà2,43/33áâà3,43/33áâà4
7700000000000100030
43/33áâà6,44ª1,44ª2,44ª3,44ª3áâà2,45
7700000000000100031
45áâà1,45ª2,45ª3,45ª4,45ª5,46,46áâà2
7700000000000100032
47ª1,47ª2,47ª3,47ª4,48,48ª2,49,49áâà1
7700000000000100033
49ª2,49ª3,51,51ª5,53ª4,53ª4áâà2,53ª5
7700000000000100034
55,55áâà2,55áâà1,57áâà1,57áâà2,57ª1
7700000000000100035
57ª4,59ª1,59ª2
7700000000000100036
1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà6
7700000000000110001
1áâà7,1áâà8,1áâà10,1áâà11,1áâà12,1ª3
7700000000000110002
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6
7700000000000110003
2áâà7,2áâà8,2áâà10,2áâà24,2áâà25
7700000000000110004
2áâà26,2áâà29,2áâà30,2áâà31,2áâà33
7700000000000110005
1ª1,1ª2,3áâà1,4áâà1,4áâà3,4áâà4,4áâà6
7700000000000120001
4ª1,4ª2,5ª1,5ª2,5ª3,5ª4,5ª4áâà2,6,7,8
7700000000000120002
8áâà2
7700000000000120003
93ª2áâà2,97ª2áâà4,99ª4,101áâà3,101ª1
7700000000000130001
109117
101ª2,101ª3,103ª1,103ª2,103ª3,103ª4
7700000000000130002
91,91áâà2,93,93ª2,95,97ª1,97ª2
7700000000000130003
109125
97ª2áâà3,97ª3,97ª4,99ª1,99ª2,99ª3
7700000000000130004
103ª4áâà2,103ª5,103ª6,103ª6áâà2,105
7700000000000130005
105ª2,105ª2áâà1,107ª1,107ª2,107ª3
7700000000000130007
107ª4,107ª5,109ª1,109ª2,109ª3
7700000000000130008
109ª3áâà2,109ª4,109ª4áâà2,109ª5,109ª6
7700000000000130009
111,111ª2,111ª2áâà1,113ª1,113ª2,113ª3
7700000000000130010
113ª4,113ª4áâà2,113ª5,115ª1,115ª2
7700000000000130011
79áâà1
7700000000000130012
49áâà1,49áâà2,49áâà3,49áâà4,49áâà5
7700000000000130013
7722
49áâà22,49áâà1,49áâà2,49áâà3
7700000000000130014
49áâà4,49áâà7,49áâà8,49áâà9
7700000000000130015
49áâà10,49áâà11,49áâà12,49áâà19
7700000000000130016
49áâà20,49áâà23,49áâà25,51,53,55,57
7700000000000130017
59,61,63,69,69áâà2,69áâà3,69áâà4
7700000000000130018
71áâà1,71ª1,71ª2,71ª3,73áâà1,73áâà2
7700000000000130019
73áâà3,73áâà4,73áâà5,73áâà7,73ª2
7700000000000130020
73áâà1,73áâà2,73áâà3
7700000000000130021
1áâà1,1áâà2,1áâà3,2,3,3_5áâà2,4,4,5,6
7700000000000130022
7709
45286580000
7,8,8áâà3,9áâà1,10,10áâà2,11,11ª2,12
7700000000000130024
13,14,15,15áâà2,15áâà3,16,16áâà2,17
7700000000000130025
17áâà1,17áâà3,17áâà6,17áâà7,18,18áâà1
7700000000000130026
20,22,22áâà2
7700000000000130027
32ª14áâà1
7700000000000130023
21áâà1,21áâà2,21áâà3,21áâà4,21áâà5
7700000000000130028
45290578000
21áâà6,21áâà8,21áâà9,21áâà10,21áâà11
7700000000000130029
21áâà12,21áâà15,21áâà16,21áâà17
7700000000000130030
21áâà22,23áâà1,23áâà2,23áâà3,23áâà4
7700000000000130031
23áâà5,23áâà6,23áâà7,23áâà9,23áâà12
7700000000000130032
23áâà13,23áâà16,25,25áâà1,25áâà3
7700000000000130033
115ª3,115ª3áâà2,115ª4,117ª1,117ª2
7700000000000130034
25áâà4,27,35,37áâà1,37áâà2
7700000000000130035
43áâà2
7700000000000130006
45290582000
39áâà1,39,39áâà1,41áâà1,41áâà2,41ª1
7700000000000130036
41áâà1,41áâà2,41áâà1,41áâà2
7700000000000130037
41áâà3,41áâà4,41áâà5,41áâà6
7700000000000130038
41áâà7,41áâà8,43áâà1,43áâà1,43áâà1
7700000000000130039
43áâà1,43áâà1,43ª1,43ª2,43ª3,43áâà1
7700000000000130040
43áâà2,43áâà3,43áâà4,43áâà5,45áâà1
7700000000000130041
45áâà2,45áâà3,45,45áâà1,45áâà2
7700000000000130042
45áâà3,45áâà4,45áâà5,45áâà6
7700000000000130043
45áâà7,45áâà8,45áâà9,45áâà10
7700000000000130044
45áâà11,45áâà12,45áâà13,45áâà14
7700000000000130045
45áâà15,45áâà16,45áâà17,47,47áâà1
7700000000000130046
47áâà2,47áâà3,47áâà5,47áâà6
7700000000000130047
24áâà1,24áâà2,26áâà1,26,26áâà1
7700000000000130048
45290594000
26áâà2,28áâà1,28áâà2,28áâà4,28áâà5
7700000000000130049
28,28
7700000000000130050
36,36áâà1,36áâà2,36áâà4,36áâà6,38áâà1
7700000000000130051
38áâà2,38áâà3,38áâà4,38áâà5,38áâà6
7700000000000130052
38áâà7,38áâà8,38áâà9,42,42áâà1,42áâà2
7700000000000130053
42áâà3,42áâà4,42áâà5,42áâà6,42áâà7
7700000000000130054
42ª1,42ª2,42ª4,42ª4,42ª5,42ª6,42ª7
7700000000000130055
42ª8,42ª9,42ª11,42ª12,42ª13,42ª14
7700000000000130056
42ª15,42ª15,42ª16,42ª17,42ª18,42ª21
7700000000000130057
42ª22,42ª23,42ª24,42ª25,42ª26,42ª27
7700000000000130058
42ª29,42ª30,42ª31,42ª32,42ª33,42ª34
7700000000000130059
42ª35,42ª36,42ª37,42ª38,42ª39,42ª41
7700000000000130060
42ª42,42ª42,42ª43,42,44áâà1,44áâà1
7700000000000130061
44áâà1,44áâà1,46,46ª1,46áâà1
7700000000000130062
46/15,46/15áâà1,46/15áâà2,46/15áâà2
7700000000000130063
46/15áâà3,46/15áâà3,46/15áâà5
7700000000000130064
46/15áâà10,46/15áâà13,46/15áâà16
7700000000000130065
46/15áâà18,46/15áâà22
7700000000000130066
30áâà1,32ª1,32ª2,32ª3,32ª4,32ª5,32ª7
7700000000000130067
32ª8,32ª10,32ª11,32ª11áâà1,32ª12,32ª13
7700000000000130068
32ª14,32ª14áâà2,32ª15,32ª19,32ª21
7700000000000130069
32ª23,32ª24,32ª25,32ª27,32ª29,32ª30
7700000000000130070
32ª31,32ª32,32ª33,32ª36,32ª39,32ª43
7700000000000130071
32ª45,32ª46,32ª47,32ª48,32ª49,32
7700000000000130072
90ª1áâà2,92,92ª2,94ª1,96ª1,96ª2
7700000000000130073
147/5ª1,147/5ª2,149,151ª1,151ª2,153ª1
7700000000000130074
109378
153ª2,153ª3áâà1,153ª3áâà2,155ª1,155ª2
7700000000000130075
155ª2áâà2,157ª1,157ª2,157ª3,157ª4
7700000000000130076
159ª1,159ª2,161ª1,161ª2,163,163ª2
7700000000000130077
163ª3,165ª1,167,167áâà2,169,169áâà2
7700000000000130078
169ª2,169ª2áâà1,169ª2áâà2,171,171_
7700000000000130079
173,173áâà2,175/32
7700000000000130080
118/7ª1,118/7ª1áâà1,118/7ª2,120ª1
7700000000000130081
120ª2,122,122áâà1,122áâà2,122ª2,124
7700000000000130082
126,128ª1,128ª2,128ª3,128ª4,128ª4áâà2
7700000000000130083
128ª5,130ª1,130ª2,130ª3,132,132áâà6
7700000000000130084
132áâà7,132ª2,134,136,138ª1,138ª1áâà1
7700000000000130085
138ª2,138ª3,140ª1,140ª2,142,142áâà2
7700000000000130086
142ª2,144,146,148ª1,148ª2,148ª3,150ª1
7700000000000130087
150ª2,150ª2áâà2,152áâà1,152áâà2,152ª2
7700000000000130088
152ª2áâà2,154/34
7700000000000130089
82/37,82/37áâà2,84ª1,84ª2áâà2,84ª3
7700000000000130090
86ª1,86ª2,86ª2áâà1,88,88ª2,90ª1
7700000000000130091
98ª2áâà2,100,102,104ª1,104ª1áâà1,104ª2
7700000000000130093
104ª2áâà2,106ª1,108,108ª2,110,110áâà1
7700000000000130095
110áâà2,110ª2,110ª3,112,116ª1
7700000000000130096
116ª1áâà1,116ª1áâà2,121,121áâà1,121/35
7700000000000130097
123,123ª1,125,127ª1,127ª2,127ª3,129
7700000000000130098
131ª1,131ª2,131ª3,131ª4,133,135ª1
7700000000000130099
135ª2,135ª2áâà2,135ª3,137ª1,137ª1áâà2
7700000000000130100
137ª2,137ª2áâà2,139,141ª1,141ª2
7700000000000130101
143áâà3,143ª1,143ª2,143ª2áâà4,145ª2
7700000000000130102
145ª2áâà1,145/8
7700000000000130103
119/22,119
7700000000000130104
48ª2,50áâà1,50ª1,50ª2,52ª1,52ª2,54
7700000000000130105
56ª1,56ª2,58áâà5,58ª1,58ª2,58ª3,58ª4
7700000000000130106
60ª1,60ª1áâà1,60ª2,60ª3,60ª4,60ª4áâà2
7700000000000130107
60ª5,62,64ª1,64ª2,66ª1,66ª2,66ª4,66ª5
7700000000000130108
68áâà2,68ª1,68ª2,68ª3,68ª4,70,72ª1
7700000000000130109
72ª2,74ª1,74ª2,74ª3,74ª4,74ª4áâà2
7700000000000130110
74ª4áâà3,76ª1,76ª2,78,78áâà1,80/2ª1
7700000000000130111
80/2ª2
7700000000000130112
160ª1,160ª1áâà2,160ª2,160ª3,164ª1
7700000000000130113
109472
164ª2,164ª3,166ª2,168áâà1,168áâà2
7700000000000130114
168áâà3,168áâà4,168áâà5,168áâà6
7700000000000130115
168áâà7,168áâà1,168áâà2,168áâà3
7700000000000130116
168áâà4,168áâà5,168áâà6,168áâà7
7700000000000130117
168áâà8,168áâà9,168áâà10,168áâà11
7700000000000130118
170ª1,170ª2,170ª3,172ª1,177áâà1
7700000000000130119
177áâà2,177áâà3,177áâà4,177áâà5
7700000000000130120
185ª2,185/19,187/16,187/16áâà2
7700000000000130121
109507
187/16ª2,189,191,195ª1,195ª2,197
7700000000000130122
1/26ª1,1/26ª1áâà1,1/26ª2,1/26ª3,2/24,3
7700000000000140001
3ª2,6áâà2,6ª2,6/2áâà2
7700000000000140002
7/118,9ª1,9ª1áâà2,9ª1áâà4,9ª2,9ª2áâà1
7700000000000140003
9ª3,9ª4,9ª5,9ª5áâà2,11ª1,11ª2,11ª2áâà2
7700000000000140004
12ª1,12ª1áâà2,12ª2,14áâà1,14áâà2
7700000000000140005
14áâà3,14áâà4,14ª1,14ª2,14ª3áâà2
7700000000000140006
14ª3áâà3,16
7700000000000140007
4ª1,4ª1áâà2,4ª2,6ª1,6ª2,6ª2áâà1,6ª3,6
7700000000000150001
8,10,12ª1,12ª2,12ª2áâà2,12ª3,12ª4,12ª5
7700000000000150002
12ª6,14,14ª2,16,18,20
7700000000000150003
1/24ª1,1/24ª2,3,3ª2,3ª3,5ª1,5ª1áâà2
7700000000000150004
109457
5,6,7,9,10,12,13,14,15
7700000000000160001
3áâà1,3áâà2,3áâà3,5áâà3,5,7,7áâà1
7700000000000170001
7áâà2,7áâà3,7áâà4,8áâà1,8áâà2,8áâà3
7700000000000170002
8áâà4,8áâà5,8áâà6,8áâà7,8áâà8,8áâà9
7700000000000170003
8áâà10,8áâà11,8áâà12,8áâà13,8áâà14
7700000000000170004
8áâà15,8áâà16,8áâà17,8áâà18,8áâà19
7700000000000170005
8áâà20,8áâà22,8áâà23,8áâà24,8áâà25
7700000000000170006
8áâà26,8áâà27,8áâà28,8áâà29,8áâà30
7700000000000170007
8áâà31,8áâà32,8áâà33,8áâà34,8áâà35
7700000000000170008
8áâà37,8áâà38,8áâà39,8áâà40,8áâà41
7700000000000170009
8áâà43,8áâà44,8áâà45,8áâà47,14,73áâà3
7700000000000170010
73áâà4,73áâà6,73áâà11
7700000000000170011
1,3,3áâà2,4,4áâà1,5,5áâà1,6ª1,6ª2
7700000000000180001
7ª1,7ª2,8,9,9,10,12,13,14,15,17
7700000000000180002
17áâà3,18,19,21,21áâà2,22,22áâà1
7700000000000180003
1,2,3,4,5,6,7,8,8áâà1,8áâà2,9
7700000000000190001
4áâà1,4áâà2,10,11,12,13áâà1,13áâà2,14
7700000000000190002
15áâà1,15áâà2,15áâà3,16áâà1,16áâà2
7700000000000190003
16áâà3,16áâà4,17áâà1,17áâà2
7700000000000190004
3ª1,3ª2,3ª3,5,6,7ª1,7ª2,8,8áâà2,8áâà4
7700000000000200001
9,9/4
7700000000000200002
1,1áâà2,1áâà3,2,4,4
7700000000000210001
109202
8áâà1,8áâà2,8áâà3,8áâà5,8áâà7,8áâà8
7700000000000220001
8áâà9,8áâà10,8áâà11,8áâà12,8áâà13
7700000000000220002
8áâà14,8áâà15,8áâà16,8áâà17,8áâà18
7700000000000220003
8áâà19,8áâà20,8áâà21,8áâà22,8áâà23
7700000000000220004
8áâà24,8áâà25,8áâà26,8áâà27,8áâà28
7700000000000220005
8áâà29,8áâà30,8áâà32,8áâà33,8áâà34
7700000000000220006
1áâà1,1áâà2,1áâà3,2,3áâà1,3áâà2,3áâà4
7700000000000230001
3áâà5,3áâà6,3áâà7,3áâà8,3áâà10,3áâà11
7700000000000230002
3áâà12,3áâà13,3áâà15,3áâà16,3áâà17
7700000000000230003
3áâà20,3áâà22,3áâà23,3áâà24,3áâà25
7700000000000230004
3áâà26,3áâà27,3áâà34,6/16,8,10,10ª2,12
7700000000000230005
14áâà1,14áâà2,14áâà3,14áâà4
7700000000000230006
14áâà5,14áâà6,14áâà7,14áâà9
7700000000000230007
1,2áâà2,2ª1,2ª2,3,4ª1,4ª2,6ª1,6ª2,7
7700000000000240001
8ª1,8ª2,8,9ª1,9ª2,9ª3,10,10ª2,11
7700000000000240002
11áâà2,12ª1,12ª2,14ª1,14ª1áâà2,14ª2
7700000000000240003
18áâà5,18áâà6,18áâà7,18áâà8,18áâà9
7700000000000240004
1áâà1,1áâà2,2áâà1,2áâà2,2áâà3,2áâà4
7700000000000250001
111398
2áâà5,2áâà6,2áâà7,2áâà16,5áâà1,5áâà2
7700000000000250002
5áâà3,5áâà4,5áâà5,8áâà1,8áâà2,8áâà4
7700000000000250003
10áâà1,10áâà2,13,13áâà3,15áâà1,15áâà2
7700000000000250004
3,3áâà4,4,5,6,7,8,9,10,11,12,16ª1,16ª2
7700000000000260001
1,1áâà3
7700000000000270001
2,2/15ª1,2/15ª2,2/15ª3,8áâà6,8ª1,14ª1
7700000000000280001
14ª3,16ª1,16ª2,16ª3,18ª1,18ª2,18ª2áâà2
7700000000000280002
20áâà3,20ª1,20ª2,22/2
7700000000000280003
3áâà27,3áâà28,3áâà29,3ª1,3ª1áâà1
7700000000000280004
3ª1áâà2,3ª1áâà3,3ª2,3ª2áâà1,3ª2áâà2
7700000000000280005
5ª1,5ª1áâà1,5ª2,5ª3,5ª3áâà1,5ª3áâà2
7700000000000280006
28,28ª2,28ª3,30ª1,30ª2,30ª3,30ª4,30ª5
7700000000000280007
5ª3áâà3
7700000000000280008
4ª1,4ª2,4ª3,6ª1,6ª2,8ª1áâà3,8ª2,10
7700000000000280009
10áâà2,12ª1,12ª2,14ª2,14ª2áâà1
7700000000000280010
1,1ª1,1ª1áâà1,1ª1áâà2,1ª2,7ª1,9áâà2
7700000000000280011
32,34,36ª1,36ª2,36ª3,36ª4,36ª4áâà2,38
7700000000000280012
38áâà3,40
7700000000000280013
11áâà1,11áâà2,11áâà3,11áâà4,11áâà5
7700000000000280014
11áâà6,11áâà7,11áâà8,11áâà9,11áâà10
7700000000000280015
11áâà11,13,15,17áâà1,17áâà2,42/1ª1
7700000000000280016
42/1ª2,44ª1,44ª2,44,46,46áâà2,46ª2,48/2
7700000000000280017
1áâà1,1áâà2,1áâà3,2áâà1,2áâà2,2áâà3
7700000000000290001
2áâà4,2áâà5,2áâà6,2áâà7,2áâà8,2áâà9
7700000000000290003
2áâà11,2áâà12,2áâà13,2áâà15,2áâà16
7700000000000290004
2áâà18,2áâà19,2áâà20,2áâà22,2áâà23
7700000000000290005
2áâà24,2áâà25,2áâà26,2áâà27,4áâà1
7700000000000290006
4áâà2,4áâà3,4áâà4,4áâà6,6,6áâà1,6áâà2
7700000000000290007
6/1áâà2,6,7áâà1,7áâà2,7áâà3,7áâà6
7700000000000290008
7áâà7,8,8,9áâà1,9áâà2,9áâà3,9áâà4
7700000000000290009
9áâà5,9áâà6,9áâà6,9áâà7,9áâà8,9áâà9
7700000000000290010
9áâà10,10,10áâà3,10ª1,10ª2,10ª2áâà4
7700000000000290011
11áâà1,11áâà2,11áâà3,11áâà7,11áâà8
7700000000000290012
11áâà19,11áâà20,11áâà22,11áâà24,12,14
7700000000000290013
16/2,18/1,21áâà1,21áâà2,21áâà3,21áâà4
7700000000000290014
21áâà5,21áâà6,21áâà7,21áâà8,21áâà9
7700000000000290015
21áâà10,21áâà11,21áâà12,21áâà13
7700000000000290016
21áâà14,21áâà15,21áâà16,21áâà18
7700000000000290017
21áâà19,21áâà20,21áâà22,21áâà23
7700000000000290018
21áâà24,23áâà1,23áâà2,23áâà3,23áâà4
7700000000000290019
25áâà1,25áâà2,25áâà3,25áâà4,25áâà5
7700000000000290020
25áâà6,25áâà7,25áâà8,25áâà3,27,52
7700000000000290021
11áâà23
7700000000000290002
111024
13,13áâà2
7700000000000300001
109377
22,22áâà2,24ª1,24ª2,24ª3,24ª3áâà2,24ª4
7700000000000300002
28,30,30áâà1,32ª1,32ª2,32ª3,32ª3áâà3
7700000000000300003
32ª4,32ª5,32ª5áâà3,32ª5áâà4,32ª6,34,36
7700000000000300004
36ª2,36ª3,38,40,40áâà3
7700000000000300005
15ª1,15ª3,15ª4áâà1,15ª4áâà2,15ª5,15
7700000000000300006
17ª1,17ª2,19ª1,19ª2,19ª3,19,21ª1,21ª2
7700000000000300007
21ª3,25
7700000000000300008
2ª1,2ª2,2ª4,2ª5,2ª6,2ª7,2ª8,4áâà2,4ª1
7700000000000300009
6,6áâà2,6ª2,6ª3,8ª1,8ª2,8ª3,8ª4,8ª5
7700000000000300010
8ª5áâà2,8ª8,10,12,18,20ª1,20ª2áâà1
7700000000000300011
20ª2áâà2,20ª2áâà3
7700000000000300012
3,5ª1,5ª2,5ª2áâà2,5ª3,5ª4,7,9
7700000000000300013
7áâà5
7700000000000310001
45290558000
4áâà3,4áâà7,4áâà9,4áâà13,4áâà22,4áâà24
7700000000000310002
4áâà26,4áâà27,4áâà28,4áâà29,4áâà33
7700000000000310003
4áâà34,4áâà38,4áâà39,4áâà40,4áâà42
7700000000000310004
4áâà46,4áâà47,4áâà51,4áâà52,4áâà53,5
7700000000000310005
6áâà1,6áâà2,6áâà3,6áâà4,6áâà5,6áâà6
7700000000000310006
6áâà8,6áâà9,6áâà14,6áâà15,7áâà1,7áâà4
7700000000000310007
7áâà6,7áâà7,8áâà1,8áâà2,8áâà3,8áâà4
7700000000000310008
8áâà5,8áâà6,8áâà7,8áâà8,8áâà9,8áâà10
7700000000000310009
8áâà11,8áâà12,8áâà13,16áâà1,16áâà2
7700000000000310010
16áâà3,16áâà4,16áâà5,17áâà1,17áâà2
7700000000000310011
17áâà3,17áâà4,17áâà5,18áâà1,18áâà2
7700000000000310012
18áâà3,18áâà4,18áâà5,18áâà6,19áâà1
7700000000000310013
19áâà2,19áâà3,19áâà4,19áâà5,19áâà6
7700000000000310014
19áâà7,19áâà8,19áâà9,19áâà12,19áâà13
7700000000000310015
19áâà14,19áâà15,19áâà16,19áâà17
7700000000000310016
19áâà18,19áâà19,19áâà20,19áâà21
7700000000000310017
19áâà22,19áâà23,19áâà25,19áâà26
7700000000000310018
19áâà27,19áâà28,19áâà29,19áâà30
7700000000000310019
19áâà31,19áâà32,19áâà33,19áâà34
7700000000000310020
19áâà37,19áâà39,19áâà40,19áâà41
7700000000000310021
19áâà43,19áâà45,19áâà47,19áâà50
7700000000000310022
19áâà54,19áâà55,20,20áâà1,20áâà2
7700000000000310023
20áâà3,20áâà6,20áâà7,20áâà11,20áâà11
7700000000000310024
22áâà1,22áâà1,22áâà2,22áâà4,22áâà5
7700000000000310025
22áâà16,22áâà17,22áâà27,22áâà28
7700000000000310026
22áâà29,25áâà1,25áâà2,25áâà3,25áâà4
7700000000000310027
1,2/1áâà1,2/1áâà2,2/1áâà3,2/1áâà5
7700000000000320001
2/1áâà6,2/1áâà7,2/1áâà8,2/1áâà9
7700000000000320002
2/1áâà10,2/1áâà11,2/1áâà12,2/1áâà13
7700000000000320003
2/1áâà14,2/1áâà15,2/1áâà16,2/1áâà17
7700000000000320004
2/1áâà18,2/1áâà19,2/1áâà20,2/1áâà21
7700000000000320005
2/1áâà22,2/1áâà24,2/1áâà25,2/1áâà26
7700000000000320006
2/1áâà27,2/1áâà28,2/1áâà29,2/1áâà30
7700000000000320007
2/1áâà31,2/1áâà32,2/1áâà33,2/1áâà37
7700000000000320008
2/1áâà41,2/1áâà44,2/1áâà47,2/1áâà49,9
7700000000000320009
10áâà1,10áâà2,10áâà3,10áâà4,13
7700000000000320010
3,4,4,6,6ª2,8,10áâà1,10áâà4,10áâà5
7700000000000330001
10áâà6,10áâà7,10áâà8,10áâà11,10áâà13
7700000000000330002
14áâà1,14áâà1,14áâà1,14áâà2,14áâà3
7700000000000330003
14áâà4,14áâà6
7700000000000330004
36
7700000000000340001
45290564000
5/1,7áâà3,7/2,8áâà1,9,10,11,12,12áâà1
7700000000000340002
12áâà2,13,14áâà1,14áâà2,14áâà3,14áâà4
7700000000000340003
14áâà6,14áâà7,14áâà8,15,15áâà12
7700000000000340004
15áâà1,15áâà2,15áâà3,15áâà4
7700000000000340005
15áâà5,15áâà6,15áâà7,15áâà9
7700000000000340006
15áâà10,15áâà11,15áâà12,17áâà1
7700000000000340007
17áâà2,17áâà1,17áâà1,17áâà2
7700000000000340008
17áâà3,17áâà4,17áâà5,19áâà1,19áâà2
7700000000000340009
19áâà3,19áâà5,32áâà1,32áâà2,32áâà3
7700000000000340010
32áâà4,32áâà5,32áâà6,32áâà7,32áâà9
7700000000000340011
32áâà10,32áâà11,32áâà12,32áâà15
7700000000000340012
32áâà16,32áâà19,32áâà20,32áâà3
7700000000000340013
32áâà4,36áâà1,36áâà2,36áâà3,36áâà1
7700000000000340014
1ª1,1ª2,2ª1,2ª2,2ª3,3ª1,3ª2,4,5ª1,5ª2,7
7700000000000350001
1,2,3,4,5,6,7,8,10,10áâà2,10áâà3
7700000000000360001
10áâà4,12,12áâà2,14áâà1,14áâà2,14áâà3
7700000000000360002
14áâà4,14áâà5,16áâà1,16áâà2,16áâà3
7700000000000360003
2/6,4,6,6,8/9,10,12
7700000000000370001
1,2,2áâà2,2áâà3
7700000000000380001
32áâà1,32áâà2,32áâà3,32áâà5
7700000000000400001
109518
32áâà6,32áâà7,32áâà8,32áâà9
7700000000000400002
32áâà10,32áâà11,32áâà12,32áâà14
7700000000000400003
32áâà18,32áâà52,34áâà1,34áâà2
7700000000000400004
34áâà4,34áâà6,34áâà7,34áâà8,38áâà1
7700000000000400005
7700000000000400006
38áâà7,38áâà8,38áâà9,38áâà10,40áâà1
7700000000000400007
40áâà1,40áâà2,40áâà3,40áâà4
7700000000000400008
40áâà5,40áâà11,40áâà12,40áâà16,46
7700000000000400009
46áâà1,46áâà2,46áâà3,48,48áâà1,48áâà2
7700000000000400010
2áâà1,2áâà2,2áâà4,2áâà5,2áâà6,2áâà7
7700000000000400011
6áâà1,6áâà2,6áâà3,6áâà4,8áâà1,8áâà2
7700000000000400012
8áâà3,8áâà8,32áâà4,32áâà26,32áâà43
7700000000000400013
4áâà1,4áâà1,4áâà2,4áâà2,4áâà3,4áâà4
7700000000000400015
4áâà5,29áâà6
7700000000000400016
11/16
7700000000000410001
3,3ª2,4,6,7ª1,7ª2,7ª3,7ª4,7ª7,9ª1,9ª2
7700000000000410002
9ª3,9ª3áâà8,9ª4,9ª5,9ª5áâà2,10/14,11
7700000000000410003
12,14ª1,14ª2,16,16áâà2,18ª1,18ª2,20/9
7700000000000410004
25,27ª1,29ª1
7700000000000410005
31áâà4,31ª1,31ª1áâà3,33ª1,33ª1áâà2
7700000000000410006
33ª2,33ª3,35,39,41ª1,41ª2,41ª2áâà2
7700000000000410007
41ª3,43,43,45ª1,45ª2,45ª2áâà2,45ª3,45ª4
7700000000000410008
43áâà1
7700000000000410009
13ª1,13ª2,13ª3,15ª1,15ª2,15ª4,17ª1
7700000000000410010
17ª1áâà2,17ª2,17ª3,17ª3áâà2,17ª4
7700000000000410011
17ª4áâà4,17ª5,19ª1,19ª2,21ª1,22/14,24
7700000000000410012
24ª2,26,28áâà1,28ª1,28ª2,28ª3,28ª4,30
7700000000000410013
30ª2,30ª3,32ª1,32ª2,32ª3,32ª4,32ª5
7700000000000410014
32ª5áâà2,32ª5áâà3,32ª5áâà7,32ª6,36áâà1
7700000000000410015
36áâà2,36áâà3,36áâà4,36ª1,36ª2,38,40
7700000000000410016
1,1áâà1,2áâà1,2áâà2,2áâà3,2áâà4,3,5
7700000000000420001
7700000000000420002
6áâà7,6áâà8,6áâà1,6áâà2,6áâà3
7700000000000420003
6áâà4,6áâà5,6áâà6,6áâà7,6áâà8
7700000000000420004
6áâà9,6áâà10,6áâà11,7,9,9,9
7700000000000420005
9áâà3,9áâà1,9áâà2,11,13,15,17,19
7700000000000420006
2,3,4,5,6,7,9,10,10áâà2,11,12,13,14,16
7700000000000430001
2ª1,2ª2,2ª2áâà3,2ª5,4,6,6ª2,8ª1,8ª2,10
7700000000000440001
2,3,4,6,6áâà3,8,8,10,12áâà2,14
7700000000000450001
14áâà1,14áâà2,15áâà1,18/8,20,20áâà2
7700000000000450002
20áâà1,20áâà2,20áâà3,20áâà7,22,24
7700000000000450003
7700000000000450004
2áâà2,2áâà3,2ª1,2ª2,6,8,10,11,12,13ª1
7700000000000460001
13ª2,14ª1,14ª2,14ª2áâà2,15/4,16,18,20
7700000000000460002
22,24,26/6
7700000000000460003
1/23ª1,1/23ª2,3,5,5áâà4,7,9
7700000000000460004
1áâà1,1áâà2,1áâà3,1áâà4,1áâà8,1áâà11,4
7700000000000470001
4áâà3,4áâà4,4áâà5,4áâà6,4áâà7,4áâà8
7700000000000470002
4áâà10,4áâà11,4áâà12,4áâà13,4áâà14
7700000000000470003
4áâà16,4áâà17,4áâà18,4áâà19,4áâà20
7700000000000470004
4áâà21,4áâà22,4áâà23,4áâà24,4áâà28
7700000000000470005
4áâà30,4áâà31,4áâà32,4áâà34,4áâà45
7700000000000470006
4áâà46,4áâà47,4áâà52,5áâà1,5áâà2,5áâà3
7700000000000470007
5áâà4,5áâà1,5áâà2,5áâà3,5áâà4
7700000000000470008
5áâà5,5áâà6,5áâà8,5áâà9,5áâà1
7700000000000470009
7áâà1,7áâà2,7áâà3,7áâà4,7áâà5,7áâà6
7700000000000470010
7áâà7,7áâà8,7áâà9,7áâà10
7700000000000470011
4áâà1,4áâà2,4áâà1,4áâà2,4áâà3
7700000000000480001
16áâà20,16áâà21,22áâà1,22áâà2,22áâà3
7700000000000480002
4áâà4,4áâà5,4áâà6,4áâà7,4áâà8
7700000000000480003
4áâà9,4áâà10,4áâà11,6áâà1,6áâà2
7700000000000480004
6áâà3,10áâà1,10áâà2,10áâà3,10áâà4
7700000000000480005
10áâà5,10áâà6,10áâà8,10áâà23,12áâà1
7700000000000480006
12áâà2,12áâà3,12áâà4,12áâà5,16áâà1
7700000000000480007
16áâà2,16áâà3,16áâà4,16áâà5,16áâà6
7700000000000480008
16áâà7,16áâà8,16áâà9,16áâà10,16áâà11
7700000000000480009
16áâà12,16áâà13,16áâà14,16áâà19
7700000000000480010
22áâà4,22áâà5,22áâà6,22áâà9
7700000000000480011
2ª1,2ª2,6,6áâà1,8ª1,10ª1,10ª2
7700000000000490001
109145
5ª2,12,13ª2,14ª1,14ª2,14ª3,16,16áâà1
7700000000000490002
19ª1,19ª2,21,23áâà1,27,29,37áâà1
7700000000000490003
37áâà2,39,63,67,71_73,73,83,85,89
7700000000000490004
107áâà,109,123,147áâà1,147áâà2
7700000000000490005
147áâà3,147áâà4,147áâà5,147áâà6
7700000000000490006
147áâà7,147áâà8,147áâà9,157,159,161
7700000000000490007
214,216,218,220,222,224,226_228,230
7700000000000490008
232,232_234,236,238,240,242,244,246
7700000000000490009
1ª1,1ª2,1ª2áâà3,1ª3,3,4,5,9
7700000000000500001
3ª1,3ª2,3ª2áâà3,3ª3,3ª4,4,5,5ª2,6,6ª2
7700000000000510001
109444
8ª1,8ª2,8ª2áâà3,9,9áâà2,10ª1,10ª2,16
7700000000000510002
16áâà1,16áâà2,16áâà3,16áâà4,16áâà5
7700000000000510003
16áâà6,16áâà7,16áâà8,16áâà9,17ª1,17ª2
7700000000000510004
17ª3,17ª4,17ª5,17ª5áâà2,17ª6,17ª8
7700000000000510005
17ª8áâà1,19áâà2,19áâà3,19ª2,19
7700000000000510006
19áâà1,19áâà2,19áâà3,19áâà4
7700000000000510007
19áâà5,21,21áâà2,21áâà1,21áâà2
7700000000000510008
21áâà3,21áâà5,21áâà9,23áâà1,23áâà2
7700000000000510009
áâà1,1,1áâà2,2/32,3ª1,3ª2,3ª2áâà3,3ª3
7700000000000520001
3ª5,3ª5áâà2,4,4áâà2,4ª2,5,5ª2,6,6áâà2
7700000000000520002
6,7ª1,7ª2,7ª2áâà3,7ª3,7ª4,7ª5,7ª6
7700000000000520003
7ª6áâà2,7ª7,8,8,8áâà2,9ª1,9ª1áâà2
7700000000000520004
9ª3,10áâà1,10ª2,10ª3,10ª4,10ª5,10áâà3
7700000000000520005
10áâà2,10áâà1,11ª1,11ª2,12,13ª1,14ª2
7700000000000520006
14ª3,14,15/189
7700000000000520007
1,1áâà1,1áâà2
7700000000000530001
2,2áâà2,2áâà3,2áâà4,2áâà5,2áâà7,2áâà8
7700000000000530002
2áâà9,2áâà10,2,3áâà1,3áâà2,3áâà3
7700000000000530003
3áâà4,3áâà7,3áâà8,3áâà9,3áâà13,3áâà14
7700000000000530004
3áâà15,3áâà17,3áâà20,3áâà21,3áâà23
7700000000000530005
4ª1áâà1,4ª1áâà2,4ª1áâà3,4ª2áâà1
7700000000000530006
4ª2áâà2,4_,5,5,6áâà1,6áâà2,6áâà4
7700000000000530007
6áâà5,6áâà6,6áâà7,6áâà8,6áâà9,6áâà10,7
7700000000000530008
8ª2áâà1,8ª2áâà2,8ª2áâà6,8ª3áâà1
7700000000000530009
8ª3áâà8,8ª5áâà1,9ª1,9ª1áâà2,9ª2,9ª3
7700000000000530010
9ª4,9ª5,10,10áâà2,10ª1,10ª2,10ª2áâà2
7700000000000530011
10ª3áâà1,10ª3áâà2,10ª3áâà3,10ª3áâà4
7700000000000530012
10ª3áâà5,10ª3áâà6,10ª5,10ª5áâà1,11áâà1
7700000000000530013
11ª1,11ª2,11ª3,11ª4,11ª5,11ª6,12
7700000000000530014
13áâà1,13ª1,13ª2,13ª3,13ª5,14/13
7700000000000530015
14/13áâà2,15áâà1,15ª1,15ª1áâà2,15ª2
7700000000000530016
15ª2áâà2,15ª2áâà3,15ª3,15ª4,16ª1
7700000000000530017
16ª1áâà2,16ª2,16ª3,17,18ª1,18ª2,18ª3
7700000000000530018
25áâà1,25ª1,25ª2,28/7,30,31
7700000000000530019
1,8,10,35,39,49ª1,49ª2,49ª2áâà2
7700000000000540001
9/20áâà33,9/20ª1,11,11áâà1,11áâà2,13
7700000000000550001
19,19ª2,19/48,21,23ª1,25áâà1,25áâà2
7700000000000550002
25ª1,25ª3,25ª3áâà2,25ª3áâà6,27ª1,27ª2
7700000000000550003
13áâà3,13ª1,13ª1áâà1,13áâà1,13áâà2
7700000000000550004
13áâà3,13áâà4,13áâà5
7700000000000550005
12ª1,12ª2,12ª3,14,16ª1,16ª1áâà2,16ª2
7700000000000550007
18ª1,18ª2,18ª2áâà5,18ª2áâà9,18ª3,20
7700000000000550008
20áâà3,20,20áâà2
7700000000000550009
24,24áâà1,24ª2,24ª3,26ª1,26ª2,26ª3
7700000000000550010
26ª3áâà2,26ª4,28,30,30áâà1,32ª1,32ª2
7700000000000550011
34,34ª1,36,38
7700000000000550012
40,40áâà3,42,44,46ª1,46ª2,48,50ª2
7700000000000550013
50/26,52áâà5,52/29áâà1,52/29áâà2
7700000000000550014
52/29áâà3,52/29áâà4,54áâà1,54áâà2
7700000000000550015
54áâà3,54áâà4,54áâà5,54áâà6,54áâà7
7700000000000550016
27ª3,27ª4,27ª5áâà9,27ª9,27,29áâà4
7700000000000550017
29áâà6,29ª1,29ª2,29ª3,29ª5,31ª1
7700000000000550018
1áâà3,3áâà1,3áâà2,3áâà5,3áâà6,3ª1,3ª2
7700000000000550019
3áâà2,5ª1,5ª1áâà1,5ª2
7700000000000550020
31ª2áâà1,31ª2áâà2,37ª1,37ª2,39ª1,39ª2
7700000000000550021
39ª3,39ª4,41ª1,41ª2áâà1,41ª2áâà2,41ª3
7700000000000550022
41ª3áâà3,41ª4,41ª4áâà2,41,43,45,47,49
7700000000000550023
51áâà1,51áâà2,51áâà3,51áâà5,51áâà6
7700000000000550024
51áâà7,51áâà8,51áâà9,51áâà10,51áâà12
7700000000000550025
51áâà14,51áâà15,51áâà16,51áâà17
7700000000000550026
51áâà18,51áâà19,51áâà20,51áâà21
7700000000000550027
51áâà22,51áâà23,51áâà24,51áâà25,51
7700000000000550028
53,55áâà1,113ª6,114ª5
7700000000000550029
2/22,4áâà3,4ª1,4ª2,4ª3,6ª1,6ª1áâà2
7700000000000550030
53ª1
7700000000000550006
áâà1,1/12,2/10,3,6,6áâà1,6áâà2,6áâà3
7700000000000560001
6áâà3,6áâà5,6áâà6,6áâà7,6áâà8,6áâà9
7700000000000560002
6áâà10,6áâà11,6áâà11,6áâà12,6áâà12
7700000000000560003
6áâà13,6áâà15,6áâà15,6áâà15,6áâà16
7700000000000560004
6áâà17,6áâà18,6áâà18,6áâà19,6áâà19
7700000000000560005
6áâà20,6áâà21,6áâà22,6áâà24,6áâà25
7700000000000560006
6áâà26,6áâà27,6áâà28,6áâà29,6áâà31
7700000000000560007
6áâà32,6áâà32,6áâà33,6áâà34,6áâà36
7700000000000560008
6áâà36,6áâà36,6áâà37,6áâà38,6áâà49
7700000000000560009
6áâà50,6áâà51,6áâà52,6áâà53,6áâà61
7700000000000560010
6áâà62,6áâà62,6áâà63,6áâà64,6áâà72
7700000000000560011
6áâà75,6áâà85,6áâà86,7,7áâà2,7ª2,7ª3
7700000000000560012
7,7áâà2,9
7700000000000560013
1,2,3,3ª2,4,5ª1,5ª2,6,6ª2,12,12ª2,14
7700000000000570001
14,14áâà2,15,17,17áâà1
7700000000000570003
5ª2áâà2
7700000000000570002
1áâà1,1áâà2,1áâà3,1áâà4,2,3áâà1,3áâà2
7700000000000580001
3áâà3,3áâà4,3áâà5,3áâà6,3áâà7,3áâà8
7700000000000580002
3áâà9,3áâà10,3áâà11,3áâà12,3áâà14
7700000000000580003
3áâà15,3áâà16,4/2,4/2áâà2,5áâà1,5áâà2
7700000000000580004
5áâà3,5áâà5,5áâà6,5áâà7,5áâà8,5áâà9
7700000000000580005
5áâà10,5áâà11,5áâà12,5áâà14,5áâà15
7700000000000580006
7700000000000590001
2/6,4,4,4áâà1,5,6,7,8,8ª1,8,9,10,11
7700000000000600001
12ª1,12ª2,13,13ª2,14,14áâà2,15ª1,15ª2
7700000000000600002
16,17,18ª1,18ª2,19,20ª1,20ª2,21,22ª1
7700000000000600003
22ª2,22ª3,22ª3áâà2,22ª4,22áâà2,23
7700000000000600004
24ª3,25,25_27,26,27,28/7,28/7áâà5,29ª1
7700000000000600005
29ª3,30/8,31,31áâà2,31áâà3,31áâà4
7700000000000600006
31áâà5,32/7,33,33áâà2,33ª1,33ª3,34,35
7700000000000600007
36/8,37,38,39,39áâà1,39áâà2,41,43,45/9
7700000000000600008
47/10ª1,49ª1,49ª2
7700000000000600009
51/1
7700000000000600010
ª31,1ª1,1ª1áâà3,1ª2,2,3ª1,3ª2,3ª3,5ª1
7700000000000630001
109380
45290568000
5ª2,5ª3,7ª1,7ª2,7ª2áâà3,8áâà1,8áâà2
7700000000000630002
8áâà3,8áâà4,8áâà5,11,11áâà1,11,13
7700000000000630003
13áâà2,15,15áâà2,17,17,23,25,25áâà1
7700000000000630004
25áâà2,27,31áâà1,31áâà2,31áâà3,31áâà4
7700000000000630005
31áâà5,31áâà6,31áâà7,31áâà8,31áâà9
7700000000000630006
31áâà10,31áâà11,31áâà12,31áâà13
7700000000000630007
31áâà14,31áâà15,31áâà20,31áâà142
7700000000000630008
31áâà165,31áâà176,31áâà177,31,31
7700000000000630009
6ª1,6ª2,6ª2áâà2,6ª3,6ª4,8,8ª2,10ª1
7700000000000640001
10ª2,10ª3,12,12áâà2,18/26,20ª1,20ª2
7700000000000640002
20ª3,22ª1,22ª1áâà1,22ª2,24ª1,24ª2,24ª3
7700000000000640003
24ª4,26,26ª2,28,28ª2
7700000000000640004
30ª1,30ª1áâà1,30ª2,30ª3,32ª1,32ª2,34ª1
7700000000000640005
34ª1áâà1,34ª2,34ª3
7700000000000640006
áâà1,áâà3,1ª3,1ª5,3,3áâà2,9ª1,9ª2,9ª3
7700000000000640007
9ª4,9ª5,11ª1,11ª1áâà2,11ª2,11ª3,13ª1
7700000000000640008
13ª2,13ª2áâà2,13ª3,13ª4,13ª5,15ª1
7700000000000640009
15ª1áâà3,15ª2,15ª3,15ª4,15ª5,15ª6
7700000000000640010
15ª6áâà2,17ª1,17ª2,17ª2áâà2,17ª3,17ª4
7700000000000640011
15,15ª2,15ª2áâà2,17,17ª2,17,18,19,19
7700000000000650001
109386
20,20ª2,21,22,22áâà1,22áâà2,22áâà4
7700000000000650002
23áâà1,25áâà5,27áâà1,27áâà2,27áâà3
7700000000000650003
28,28ª2,30,30ª2,32,34,36,38/2
7700000000000650004
37
7700000000000650005
109387
37ª1,37ª2,37ª3,37ª4,37ª5,37ª6,37ª7
7700000000000650006
41áâà1,41áâà2,41áâà3,41áâà4,41áâà5
7700000000000650007
41áâà6,41áâà7,41áâà8,41áâà9,41áâà10
7700000000000650008
27,27áâà1
7700000000000650010
2,2,3,4,4ª2,5,5,5áâà1,5áâà3,6,6,7
7700000000000650011
7,7,8,8ª2,8ª2áâà2,8ª2áâà3,9/10,9,11
7700000000000650012
11áâà2,12,13áâà1,13áâà2,14,14áâà1,16
7700000000000650013
27áâà1,27áâà2,27áâà3,27áâà4,27áâà5
7700000000000650014
27áâà6,27áâà7,27áâà8,27áâà9,27áâà10
7700000000000650015
27áâà11,27áâà13,27áâà14,27áâà15
7700000000000650016
27áâà31,27áâà35,31,31áâà1,33,37áâà8
7700000000000650017
37áâà17,42,43áâà1,43áâà3,43áâà4,43áâà7
7700000000000650018
43áâà8,43áâà9,43áâà10,44,46,47áâà1
7700000000000650019
47áâà2,47áâà3,47áâà4,47áâà5,47áâà6
7700000000000650020
47áâà7,47áâà8,47áâà9,48,62áâà1
7700000000000650021
74áâà10,74áâà11,82áâà10,82áâà11
7700000000000650022
84áâà11,84áâà12
7700000000000650023
50/22,52ª1,52ª1áâà2,52ª2,54ª1,54ª2
7700000000000650024
109559
54ª3,56áâà2,56ª1,56ª2,56ª3,57,58ª1
7700000000000650025
58ª2,60ª1,62,64áâà3,64ª1,64ª2,66,70
7700000000000650026
70áâà2,70áâà4,72,74,74áâà6,74áâà7
7700000000000650027
74áâà8,74áâà9,76,78,84áâà1,84áâà2
7700000000000650028
84áâà3,84áâà4,84áâà5
7700000000000650009
1áâà45,1áâà47,2,4áâà1,4áâà2,6ª1,6ª2
7700000000000660001
8ª1,8ª2,8ª3,8ª3áâà2,8ª3áâà3,10,14áâà1
7700000000000660002
2,3ª1,3ª2,4ª1,4ª2,5,6,7,7áâà2,8,9
7700000000000670001
9áâà2,10ª1,10ª2,10ª3,12/20,14ª1
7700000000000670002
14ª1áâà2,14ª2,14ª3,14ª4,14ª5,15ª2
7700000000000670003
15/22,16ª1,16ª2,16ª3,17ª1,17ª2,17ª3
7700000000000670004
17ª3áâà2,18ª1,18ª2,18ª3,18ª4,19,19ª2
7700000000000670005
20,21,21áâà4,21ª1áâà5,21ª2,23ª1,23ª2
7700000000000670006
23ª2áâà3,23ª3,23ª4
7700000000000670007
22,22ª1,22ª1áâà1,22ª2,22ª3,22ª4,24ª1
7700000000000670008
24ª2,24ª2áâà2,25ª1,25ª2áâà1,25ª2áâà2
7700000000000670009
25ª3,26,26áâà2,26ª2áâà1,26ª2áâà2
7700000000000670010
26ª2áâà3,26ª2áâà4,26ª2áâà5,26ª2áâà11
7700000000000670011
26ª2áâà12,26ª2áâà13,26ª2áâà14
7700000000000670012
26ª2áâà15,26ª2áâà16,27áâà1,27ª1,27ª2
7700000000000670013
27ª3,27ª3áâà2,27ª4,28áâà1,28áâà3
7700000000000670014
28áâà4,28áâà5,28áâà6,28áâà7,28áâà8
7700000000000670015
28áâà9,29/179,29,30áâà1,30áâà2,30áâà3
7700000000000670016
31,32/156áâà1,32/156áâà2,33ª1,33ª2
7700000000000670017
34áâà1,34áâà2,34áâà3,34ª1,34ª2,34ª3
7700000000000670018
34ª4,34ª5,35,36ª1,36ª2
7700000000000670019
áâà1,3ª1,3ª1áâà2,3ª2,5ª1,5ª2,5ª2áâà2
7700000000000680001
7ª1,7ª2,7ª3,9ª1,9ª1áâà2,9ª2,11
7700000000000680002
13/38áâà1,13/38áâà2,15,17,19ª1,19ª2
7700000000000680003
21ª1,21ª2,21ª3,21ª3áâà1,21ª3áâà2,21ª4
7700000000000680004
21ª4áâà2,23,23áâà2,25
7700000000000680005
7700000000000690001
109052
2áâà7,2áâà8,2áâà9,2áâà10,6,6,8áâà1
7700000000000690002
8áâà2,8áâà3,8áâà4,8áâà5,8áâà6,8áâà7
7700000000000690003
8áâà8,8áâà9,8áâà10,8áâà11,8áâà18
7700000000000690004
12áâà1,12áâà2,12áâà3,12áâà4,12áâà5
7700000000000690005
12áâà6,12áâà7,12áâà8,12áâà9,12áâà10
7700000000000690006
12áâà11,12áâà12,12áâà13,12áâà14,12áâà15
7700000000000690007
10áâà1,10áâà2,10áâà3,10áâà4
7700000000000690008
10áâà5,10áâà7,10áâà8,10áâà9
7700000000000690009
10áâà10,10áâà11,10áâà12,10áâà13
7700000000000690010
10áâà14,10áâà15,10áâà16,10áâà17
7700000000000690011
10áâà18,10áâà19,10áâà22,10áâà23
7700000000000690012
10áâà29,14
7700000000000690013
1/55,2/57,3,4,4áâà5,4,5,5ª1,6,6áâà2
7700000000000700001
6áâà3,6áâà6
7700000000000700002
9,9áâà5,9,9,9,9áâà1,10ª1,10ª2,11
7700000000000710001
109029
11,11,11,12,13,13,13áâà2,13áâà3
7700000000000710003
13,14áâà3,14ª1,14ª2,16,17,17áâà2,18
7700000000000710004
19,20,24,25,26,26áâà2,26áâà3,27áâà1
7700000000000710005
27áâà3,27áâà4,27áâà1,28,28áâà7,32áâà
7700000000000710006
32áâà,32áâà1,32áâà3,32áâà4,32áâà5
7700000000000710007
32áâà6,32áâà10,32áâà15,32áâà15
7700000000000710008
32áâà16,34,34áâà3,36
7700000000000710009
27áâà2,27,27áâà1
7700000000000710002
29_33áâà1,29_33áâà2,29_33áâà3
7700000000000710010
29_33áâà4,29_33áâà5,29_33áâà6
7700000000000710011
29_33áâà7,29_33áâà9,29_33áâà11
7700000000000710012
29_33áâà12,29_33áâà13,29_33áâà14
7700000000000710013
29_33áâà15,29_33áâà16,29_33áâà17
7700000000000710014
29_33áâà18,29_33áâà19,29_33áâà20
7700000000000710015
29_33áâà27,29_33áâà28,29_33áâà29
7700000000000710016
29_33áâà30,29_33áâà31,29_33áâà32
7700000000000710017
29_33áâà36,29_33áâà40,47,49,50,51,52
7700000000000710018
52áâà1,52áâà2,52áâà3,52áâà4,52áâà6,53
7700000000000710019
54,55,55áâà1,56,56áâà2,56,56áâà1
7700000000000710020
58ª1,58ª2,58ª3,59,60,61,62,63,63áâà2
7700000000000710021
64,65,66,67,67áâà1,68,70ª1,70ª2
7700000000000710022
70ª2áâà2,70ª2áâà3,70ª3,70ª3áâà2,71
7700000000000710023
72/2,73,74áâà1,74áâà2,74áâà3,74áâà4
7700000000000710024
74áâà5,74áâà8,74áâà13,74áâà14,75
7700000000000710025
75áâà1,75,76,76ª2,76,78ª1,78ª1áâà2
7700000000000710026
78ª2,79áâà1,80áâà3,80ª1,80ª2,80ª3,82
7700000000000710027
83,83,83,84,84ª1,85,86ª,86ª,86áâà1
7700000000000710028
86ª3áâà1,88ª1,88ª2,90ª1,90ª2,90,92ª1
7700000000000710029
92ª2,92ª3,92ª3áâà2,94ª1,94ª1áâà1,94ª2
7700000000000710030
94ª3,94ª4,97áâà1,97áâà2,97áâà5,98,98
7700000000000710031
99,99áâà1,99áâà2,102áâà2,102áâà2
7700000000000710032
102áâà12,102áâà13,102áâà19,102áâà24
7700000000000710033
102áâà25,102áâà26,102áâà29,102áâà30
7700000000000710034
102áâà31,102áâà32,102áâà33,102áâà34
7700000000000710035
102áâà35,102áâà36,102áâà37,102áâà38
7700000000000710036
102áâà1,102áâà2,104,104áâà1,104áâà2
7700000000000710037
104áâà4,104áâà5,104áâà6,104áâà7
7700000000000710038
104áâà9,104ª3,105áâà1,105áâà2,105áâà3
7700000000000710039
3áâà1,3áâà1,4ª1,4ª2,5,6,6áâà3,7ª5,7
7700000000000710040
109147
105áâà4,105áâà5,105áâà6,105áâà7
7700000000000710041
105áâà8,105áâà9,105áâà1,106ª1
7700000000000710042
106ª1áâà1,106ª1áâà2,106ª1áâà3
7700000000000710043
106ª1áâà4,106ª1áâà5,106ª1áâà6
7700000000000710044
106ª1áâà10,106ª1áâà11,106ª1áâà12
7700000000000710045
1áâà1,1_7áâà1,1,2áâà3,2áâà4,2ª1,2ª2,3
7700000000000710046
7áâà2,7,8
7700000000000710047
1,3,3áâà2,5,7ª1,9,10,10ª2,11,13/8,14
7700000000000720001
15/5,16ª1,16ª2,16ª2áâà2,17,18,18ª1
7700000000000720002
18ª1áâà3,19,19ª2,20ª1,20ª2,20ª3
7700000000000720003
20ª3áâà2,20ª4,21,21ª1,21ª1áâà1,21ª2
7700000000000720004
21ª2áâà4,22ª1,22ª1áâà2,22ª2,22ª3
7700000000000720005
22ª3áâà1,22ª4,23ª1,23ª2,24,24áâà1,25
7700000000000720006
4,6,6ª2,6ª2áâà1,6ª2áâà2
7700000000000720007
3,3ª1,3ª1áâà2,4,4áâà2,5,5áâà2,6,7ª1
7700000000000730001
8ª1,8ª2,9ª1,9ª2,10,11,11áâà2,12,12áâà2
7700000000000730002
13ª1
7700000000000730003
7700000000000740001
2/8,4ª1,4ª2,6áâà6,6ª1,6ª2,6ª3
7700000000000740002
2,2áâà2,4,5ª1,10
7700000000000750001
1,1áâà2,2áâà1,2áâà2,2áâà2,2áâà3,2áâà4
7700000000000760001
2áâà5,2áâà6,2áâà7,2áâà8,2áâà9,2áâà10
7700000000000760002
2áâà16,2áâà18,2áâà19,2áâà20,2áâà21
7700000000000760004
2áâà22,2áâà23,2áâà24,2áâà25,2áâà26
7700000000000760005
2áâà27,2áâà28,2áâà29,2áâà30,2áâà31
7700000000000760006
2áâà32,2áâà33,2áâà34,2áâà35,2áâà36
7700000000000760007
2áâà37,2áâà38,2áâà39,2áâà40,2áâà41
7700000000000760010
2áâà42,2áâà43,2áâà44,2áâà45,2áâà47
7700000000000760011
2áâà48,2áâà48,2áâà49,2áâà50,2áâà51
7700000000000760012
2áâà52,2áâà53,2áâà54,2áâà55,2áâà56
7700000000000760013
2áâà57,2áâà58,2áâà59,2áâà60,2áâà61
7700000000000760014
2áâà62,2áâà63,2áâà64,2áâà67,2áâà69
7700000000000760015
2áâà70,2áâà71,2áâà72,2áâà73,2áâà74
7700000000000760016
2áâà75,2áâà78,2áâà81,2áâà83,2áâà86
7700000000000760017
2áâà87,2áâà88,2ª2,2áâà7,2áâà8,2áâà9
7700000000000760018
2áâà10,2áâà11,2áâà12,2,2áâà1
7700000000000760019
2áâà1,3áâà1,3áâà2,3áâà3,3,4áâà1
7700000000000760020
4áâà2,4áâà4,4áâà5,4áâà6,4áâà8,4áâà9
7700000000000760021
4áâà10,4áâà11,4áâà18,4áâà1,4áâà2
7700000000000760022
4áâà3,4áâà4,4áâà5,4áâà6,4áâà7
7700000000000760023
4áâà8,4áâà9,4áâà10,4áâà11,4áâà12
7700000000000760024
4áâà14,4áâà16,5,5áâà2,7,7áâà2,7,9
7700000000000760025
2áâà1,2áâà2,3,4,30ª2,30ª2áâà1
7700000000000760003
15ª1,15ª2,17,19ª1,19ª2,21,23,25,25,27
7700000000000760026
31,33,33áâà2,35,37
7700000000000760027
58/1,58/1áâà2,60,60áâà1,60áâà2,60ª2
7700000000000760028
60ª3,60ª4,60,60,62
7700000000000760029
32,32ª1,32ª2,32ª3,34,34ª2,36,36áâà2,38
7700000000000760030
40ª2áâà1,40ª2áâà2,40ª2áâà3,40ª2áâà4
7700000000000760031
40/2,42/1,44,46,46áâà1,46ª2,46ª3,46ª4
7700000000000760032
46ª5,46ª6,46ª7,48,50,52,52ª2,54
7700000000000760033
6áâà20
7700000000000760008
39áâà10,39áâà1,39áâà1,41/2,43,43áâà2
7700000000000760034
6áâà3,6ª1,6ª2,6áâà2,6áâà3,6áâà4
7700000000000760035
6áâà6,6áâà7,6áâà8,6áâà11,6áâà11
7700000000000760036
6áâà12,6áâà13,6áâà15,6áâà17
7700000000000760037
6áâà21,6áâà22,6áâà29,6áâà30
7700000000000760038
6áâà33,6áâà39,6áâà40,6áâà47
7700000000000760039
6áâà49,6áâà50,6áâà57,6áâà58
7700000000000760040
6áâà62,6áâà65,6áâà70,6áâà72
7700000000000760041
6áâà75,6áâà77,6áâà79,6áâà80
7700000000000760042
6áâà81,8áâà1,8áâà2,8áâà1,8áâà2
7700000000000760043
8áâà3,8áâà4,8áâà6,8áâà7,8áâà7
7700000000000760044
8áâà8,8áâà9,8áâà10,8áâà10
7700000000000760045
8áâà12,8áâà13,8áâà14,8áâà15
7700000000000760046
8áâà16,8áâà17,8áâà18,8áâà19
7700000000000760047
8áâà20,8áâà21,8áâà22,8áâà24
7700000000000760048
8áâà25,8áâà26,8áâà27,8áâà28
7700000000000760049
8áâà29,8áâà29,8áâà30,8áâà31
7700000000000760050
8áâà32,8áâà33,8áâà34,8áâà35
7700000000000760051
8áâà36,8áâà37,8áâà38,8áâà41
7700000000000760052
8áâà43,8áâà44,8áâà45,8áâà46
7700000000000760053
8ª2áâà10,8ª3áâà8,8ª6áâà11,8ª7áâà5
7700000000000760054
10áâà1,10áâà2,10áâà3,10áâà4,10áâà5
7700000000000760055
10áâà6,10áâà7,10áâà8,10áâà9,10áâà11
7700000000000760056
10áâà12,10áâà13,10áâà14,10áâà15
7700000000000760057
10áâà16,10áâà17,10áâà18,10áâà19
7700000000000760058
10áâà20,10áâà21,10áâà22,10áâà24
7700000000000760059
10áâà25,10áâà29,10áâà32,10áâà51
7700000000000760060
10áâà54,10áâà55,10áâà56,12,12áâà1,14
7700000000000760061
14áâà4,14ª2,16áâà1,16áâà2,16áâà3
7700000000000760062
16áâà4,16áâà5,16áâà6,16áâà7,16áâà8
7700000000000760063
16áâà10,16áâà13,16áâà14,16áâà15
7700000000000760064
16áâà17,20,20áâà1,20ª1,20ª2,20ª3,22
7700000000000760065
22ª2,22ª3,24áâà1,24ª1,24ª2,24ª2áâà1
7700000000000760066
24ª3,26áâà1,26áâà2,26áâà3,26áâà3
7700000000000760067
26áâà4,26áâà5,26áâà6,26áâà7,26áâà8
7700000000000760068
26áâà9,26áâà10,26áâà12,26áâà13,26áâà14
7700000000000760069
26áâà15,26áâà17,26áâà18,26áâà20
7700000000000760070
26áâà22,26áâà22,26áâà23,26áâà24
7700000000000760071
26áâà25,26áâà25,26áâà26,26áâà28
7700000000000760072
26áâà28,26áâà29,26áâà30,26áâà31
7700000000000760073
26áâà31,26áâà32,26áâà34,26áâà38
7700000000000760074
26áâà39,26áâà40,26áâà41,26áâà43
7700000000000760075
26áâà52,26áâà53,26áâà54,26áâà55
7700000000000760076
26áâà56,26áâà57,26áâà58,26áâà59
7700000000000760077
26áâà60,26áâà61,26áâà62,26áâà63
7700000000000760078
26áâà64,26áâà65,26áâà66,26ª2,26áâà1
7700000000000760079
28áâà1,28áâà2,30áâà1,30/15,30/15áâà1
7700000000000760080
39áâà1,39áâà2,39áâà4,39áâà5,39áâà9
7700000000000760081
45áâà1,45áâà3,45ª1,45ª2,45ª3,45ª3áâà2
7700000000000760083
45ª4,47ª1,47ª2,47ª3,49ª1,49ª2,49ª3
7700000000000760084
67/2,69,71ª1,71ª2,73,73áâà3,75áâà1
7700000000000760087
75áâà2,75ª2,75ª3,75ª4,75áâà1,77,79
7700000000000760088
81/1,81/1áâà2,81/1áâà3,81/1áâà4
7700000000000760089
64,64ª2,64ª2áâà2,68ª1,68ª2,70ª1
7700000000000760090
70ª1áâà1,70ª2,70ª2áâà2,70ª3,70ª4,70ª5
7700000000000760091
72ª1,72ª2,72ª2áâà2,74,76/2,76/2áâà1
7700000000000760092
76/2áâà2,78/1,78/1ª2,80ª1,80ª1áâà3
7700000000000760093
80ª3,80ª4,82ª1,82ª2,82ª3,82ª4,82ª5
7700000000000760094
83/2ª1,83/2ª2,84/2,84,85ª1,85ª2
7700000000000760095
86/1áâà1,86/1áâà2,86/1áâà3,87ª1,87ª2
7700000000000760096
87ª3,87ª3áâà2,88,89áâà1,89áâà2
7700000000000760097
89ª1áâà1,89ª1áâà2,89ª2,89ª3,91ª1
7700000000000760098
91ª1áâà2,91ª2,91ª3,91ª4,93áâà1,93ª1
7700000000000760099
93ª1áâà2,93ª1áâà5,93ª2,95ª1,95ª2,95ª3
7700000000000760100
95ª4,97,99áâà1,99áâà2,99áâà4,99áâà8
7700000000000760101
99áâà15,99áâà16,99ª5,99ª6,99ª7,99áâà1
7700000000000760102
103,105áâà1,105áâà2,105áâà3,105áâà4
7700000000000760103
105áâà5,105áâà6,105áâà7,105áâà8
7700000000000760104
105áâà9,105áâà10,105áâà11,105áâà12
7700000000000760105
105áâà13,105áâà14,105áâà15,105áâà16
7700000000000760106
105áâà17,105áâà18,105áâà19,105áâà20
7700000000000760107
105áâà21,105áâà22,105áâà23,107,109,259
7700000000000760108
7700000000000760009
1ª2,3ª1,3ª2,3ª3,3ª4,3ª6,3ª7,3ª7áâà2
7700000000000780001
3ª8,3ª10,3ª14,3ª15,3ª16,3ª22,3ª23,3ª24
7700000000000780002
3ª25,3ª28,3ª31,3ª32,5ª1,5ª2,7ª1,7ª2
7700000000000780003
9ª2áâà1,9ª2áâà2,9ª2áâà3,9ª2áâà4
7700000000000780004
9ª2áâà5,9ª2áâà6,9ª2áâà7,9ª2áâà8
7700000000000780005
9ª2áâà9,9ª2áâà10,11,14ª1,15ª1,15ª1áâà2
7700000000000780006
15ª3,15ª3áâà2,15ª3áâà3,15ª3áâà4,17áâà1
7700000000000780007
17áâà2,17áâà3,17áâà4,17áâà5,17ª2
7700000000000780008
4,6ª2,8ª1,8ª3,10,12áâà1,14,14ª2,16ª1
7700000000000780010
16ª2,18,20/1
7700000000000780011
26ª1,26ª2,26ª2áâà3,26ª3,26ª4,26ª5,28ª1
7700000000000780012
28ª2,28ª3,30ª1,30ª2
7700000000000780013
36áâà1,36áâà2,36áâà3,36áâà4,36áâà5
7700000000000780014
36áâà6,36áâà7,36áâà8,36ª2,36ª3,36ª4
7700000000000780015
36ª4áâà2,38áâà2,38ª1,38ª1áâà2,38ª2
7700000000000780016
38ª2áâà3,38ª2áâà7,40ª1
7700000000000780017
19,19áâà1,19áâà1,19áâà2,19áâà3
7700000000000780018
19áâà4,19áâà6,19áâà7,19áâà8,19áâà8
7700000000000780019
19áâà9,19áâà9,19áâà10,19áâà11,19áâà13
7700000000000780020
7700000000000780021
19áâà18,19áâà1,19áâà5,19áâà1,21áâà1
7700000000000780022
21áâà2,21áâà3,21áâà4,21áâà23,21áâà24
7700000000000780023
21ª2áâà1,21ª2áâà2,21,23áâà1,23áâà2
7700000000000780024
23áâà3,23áâà4,23áâà5,23áâà6,23áâà6
7700000000000780025
23áâà7,23áâà8,23áâà9,23áâà10,23áâà11
7700000000000780026
23áâà12,23áâà13,23áâà14,23áâà15
7700000000000780027
23áâà16,23áâà17,23áâà18,23áâà19
7700000000000780028
25/1ª2áâà2,25/1ª3,25/1ª4
7700000000000780029
1,3,5ª1,5ª2,5ª3,7ª1,7ª2,7ª3,9áâà2,9ª1
7700000000000800001
9ª2,9ª3,11/14
7700000000000800002
2,4,6áâà1,8,10,10áâà2,16,16áâà1
7700000000000810001
2,7áâà1,7/2áâà10,7/2ª1,7/2ª2,9áâà3
7700000000000820003
9ª1,9ª2,11,11áâà2,11áâà4,11áâà5
7700000000000820004
11ª2áâà2,11ª3,13
7700000000000820005
4áâà1
7700000000000820001
4ª1,4ª2,4,4
7700000000000820006
126áâà2
7700000000000820002
109144
118,120,124,126,126áâà1,128,130
7700000000000820007
45290572000
151,153,153áâà1,153áâà2,153áâà3
7700000000000820008
109341
153áâà4,155áâà1,155ª3,157,157ª2,157ª3
7700000000000820009
159,159ª1,159ª2,161,161áâà1,161ª1
7700000000000820010
161ª2,163/1,163/1ª1,163/1
7700000000000820012
92áâà1,92áâà2,94,94áâà1,96,96áâà1
7700000000000820014
109369
96áâà2,104,106,108,108,112,112áâà3
7700000000000820015
112áâà1,112áâà2,112áâà3
7700000000000820016
56/2áâà1,56/2áâà2,56/2áâà3,56/2áâà4
7700000000000820017
109382
56/2áâà5,56/2áâà6,56/2áâà9,60,62,64
7700000000000820018
66ª1,66ª2,66ª2áâà2,66ª2áâà4,66ª3
7700000000000820019
66ª3áâà2,66ª4,68áâà1,68áâà2,72,72áâà2
7700000000000820020
72áâà3,72áâà4,72áâà5,72áâà6,72áâà7
7700000000000820021
72áâà207,72áâà208,80,80áâà1,82áâà1
7700000000000820022
82áâà3,82áâà4,82áâà7,82áâà8,82áâà15
7700000000000820023
82áâà17,84,84áâà1,84áâà2,86áâà1,86áâà2
7700000000000820024
86áâà3,86áâà4,86áâà5,86áâà6,86áâà7
7700000000000820025
86áâà8,86áâà9,86áâà21,86áâà22,88áâà1
7700000000000820026
88áâà2,88áâà3,88áâà4,88áâà6,88áâà10
7700000000000820027
88áâà11,88áâà13,119,121/1,125,125áâà1
7700000000000820028
125áâà2,127/1,129,129/2,131,133
7700000000000820029
135/1áâà1,135/1áâà2,135áâà10,137
7700000000000820030
137áâà1,139áâà1,139áâà2,139áâà3
7700000000000820031
139áâà4,139áâà22,139áâà23,139áâà24
7700000000000820032
139áâà25,139áâà26,139,141,143ª1,143ª2
7700000000000820033
145,147,149
7700000000000820034
38,38áâà2,40,42,42,44/8,46,48áâà1
7700000000000820035
48áâà3,48,50áâà1,50áâà2,50áâà3,50
7700000000000820036
52áâà1,52áâà2,52áâà4,53,53áâà2,53áâà3
7700000000000820037
53áâà4,54áâà2,54/3,55,55áâà1,59,61
7700000000000820038
61áâà2,107/10,109,109ª2,109ª3
7700000000000820039
109ª3áâà2,111,111áâà1,111áâà2,111áâà3
7700000000000820040
111áâà4,111áâà5,113ª2,113ª3,113
7700000000000820041
113áâà2
7700000000000820042
111áâà1
7700000000000820013
18,18áâà1,18áâà2,18áâà1,18áâà2
7700000000000820043
22áâà1,22áâà2,22áâà3,22áâà4,22áâà5
7700000000000820044
22áâà6,22áâà7,22áâà8,22áâà9,22áâà10
7700000000000820045
22áâà11,22áâà12,22áâà13,22áâà14
7700000000000820046
22áâà15,22áâà16,22áâà17
7700000000000820047
14,51áâà1
7700000000000820048
6,6áâà2,6áâà3,8,8áâà3,8áâà4,8,10
7700000000000820049
7700000000000820050
10áâà6,10áâà19,10áâà27,10áâà28,10áâà29
7700000000000820051
10áâà30,10áâà34,10áâà35,10áâà36
7700000000000820052
10áâà37,10áâà38,10áâà39,10áâà40
7700000000000820053
10áâà44,10áâà1,12áâà1,12áâà2
7700000000000820054
12áâà3,12áâà4,12,14áâà2,14áâà3,14
7700000000000820055
16áâà1,16áâà2,16áâà3,16áâà4,16áâà5,16
7700000000000820056
17ª1,17ª2,17ª3,17ª3áâà1,19,21ª1,21ª2
7700000000000820057
21ª2áâà2,21,23,23áâà6,25áâà1,25/1
7700000000000820058
27/2,29,31/1,33/2ª1,33/2ª2,35ª1,35ª2
7700000000000820059
37/1,39/2,39/2áâà1,41,45,45,47,49
7700000000000820060
49,51
7700000000000820061
1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà4,1áâà5
7700000000000820062
1áâà6,1áâà7,1áâà9,1áâà1,1áâà2,1áâà3
7700000000000820063
1áâà4,1áâà5,1áâà6,1áâà7,1áâà8
7700000000000820064
1áâà9,5ª1,5ª2,5ª2áâà2,5ª3,5ª4,5ª5,5ª6
7700000000000820065
5ª7,5ª7áâà2,5ª7áâà3
7700000000000820066
1áâà8
7700000000000820011
2,2áâà1,2áâà1,2áâà2
7700000000000820067
109652
90,100,100ª2,102,114,165,165ª1,165ª1
7700000000000820068
165ª2,165ª3,165,165,167,169,169ª2
7700000000000820069
169,171,171áâà1,171ª1,171ª1,173,173
7700000000000820070
175,175áâà2,177,179/1
7700000000000820071
15/46áâà7
7700000000000820072
14/22áâà1,14/22áâà3,14/22áâà4
7700000000001560001
115088
14/22áâà5,14/22áâà6,14/22áâà7
7700000000001560002
14/22áâà8,14/22áâà9,14/22áâà10
7700000000001560003
14/22áâà11,14/22áâà12,14/22áâà13
7700000000001560004
14/22áâà14,16áâà1,16áâà2,16áâà3,16áâà4
7700000000001560005
16áâà5,16áâà6,16áâà8,16áâà9,16áâà10
7700000000001560006
16áâà12,18áâà1,18áâà2,18áâà3,18áâà1
7700000000001560007
18áâà2,18áâà3,20,20áâà1,20áâà2
7700000000001560008
20áâà3,20áâà4,26áâà1,26áâà1
7700000000001560009
26áâà2,26áâà4,26áâà5,26áâà6
7700000000001560010
26áâà7,26áâà8,26áâà9,26áâà10
7700000000001560011
26áâà11,26áâà12,26áâà13,26áâà14
7700000000001560012
26áâà16,26áâà17,26áâà28,26áâà31
7700000000001560013
26áâà32,29áâà1,29áâà2,29áâà3,29áâà4
7700000000001560014
29áâà5,29áâà7,31áâà1,31áâà2,31áâà3
7700000000001560015
31áâà4,31áâà5,31áâà10,31áâà16,31áâà17
7700000000001560016
31áâà18,31áâà19,33áâà1,33áâà2,33áâà3
7700000000001560017
33áâà4,33áâà5,33áâà6,33áâà7,33áâà8
7700000000001560018
33áâà9,34áâà1,34áâà2,34áâà3,34áâà4
7700000000001560019
34áâà5,34áâà6,34áâà7,34áâà8,34áâà9
7700000000001560020
35áâà1,35áâà2,35áâà3,35áâà4,35áâà5
7700000000001560021
8áâà1,8áâà2,8áâà3,8áâà4,8áâà5,8áâà6
7700000000001560023
115432
8/5áâà1,8/5áâà2,10áâà1,10áâà2,10áâà3
7700000000001560024
10áâà4,10áâà5,10áâà6,10áâà7,10áâà8
7700000000001560025
10áâà9,10áâà10,10áâà11,10áâà12,10áâà13
7700000000001560026
10áâà14,10áâà15,10áâà16,10áâà17
7700000000001560027
10áâà18,10áâà19,10áâà20,10áâà21
7700000000001560028
10áâà22,10áâà23,10áâà24,10áâà25
7700000000001560029
10áâà26,10áâà27,10áâà28,10áâà29
7700000000001560030
10áâà30,10áâà31,10áâà32,10áâà36
7700000000001560031
7700000000001560032
10áâà41,10áâà42,10áâà43,10áâà44
7700000000001560033
10áâà45,10áâà46,10áâà47,10áâà60
7700000000001560034
10áâà61,10áâà62,12áâà2,12áâà6
7700000000001560035
12áâà7,12áâà8,12áâà10,12ª1áâà1
7700000000001560036
12ª1áâà2,12ª1áâà3,12ª1áâà4
7700000000001560037
12ª1áâà5,12ª1áâà6,12ª1áâà13,12áâà1
7700000000001560038
12áâà2,12áâà3,12áâà4,12áâà5
7700000000001560039
27áâà1,27áâà2,27áâà3
7700000000001560040
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà7
7700000000001560041
2áâà9,5ª1,5ª1áâà14,5ª2,6áâà20,6áâà21
7700000000001560042
6áâà22,6áâà23,6áâà26,6áâà29,6áâà30
7700000000001560043
6áâà31,6áâà32,6,6áâà3,7,9,9áâà2
7700000000001560044
10áâà33,10áâà34,10áâà35,10áâà48
7700000000001560045
10áâà49,10áâà76,11áâà1,11áâà2,13
7700000000001560046
13áâà2,15,17ª1,17ª2,17ª2áâà2,19áâà1
7700000000001560047
2/20,2/20áâà2,3,3áâà2,4,4ª2,4ª2áâà2,5
7700000000001570001
5,6,7,7áâà2,7,8/23,9,12,23/18,25,27/23
7700000000001570002
3áâà2
7700000000001580002
1,1áâà1,3,5,7/7
7700000000001580001
17,21,23,23áâà2,23áâà3,25,25ª2,25ª3
7700000000001580003
25ª4,27,27ª2,27ª3,29/7
7700000000001580004
2,2,4áâà1,4áâà2,4áâà3,4áâà4,4ª2,6ª1
7700000000001580005
6ª2,6áâà3,6,8/10,9,10,11,14/8áâà1,16
7700000000001580006
18,18áâà2,20,20ª2,20ª2áâà2,20,24,24
7700000000001580007
26,26,26áâà2,28,28,30
7700000000001580008
37,37áâà2,39,41,43,43áâà2,45,47,49,51
7700000000001590001
53,55,57,59,63,65,65áâà2,69
7700000000001590002
1,2,3,5,5áâà2,7,9,11,11áâà2,13,15,17
7700000000001590003
109651
17áâà2,17,19,21,23,25,27,27áâà2,29
7700000000001590004
29áâà2,31,31áâà2,33,35
7700000000001590005
1,1áâà1,2áâà2,2ª1,2ª1áâà2,2ª1áâà3,2ª2
7700000000001600001
109235
3,4,5,6,7,8,9,10,10áâà2,11,11,12,13
7700000000001600002
1,1áâà2,3,5,6,6áâà1,6áâà2,7,7áâà2,8,9
7700000000001610001
10ª1,10ª1áâà1,10ª2,11,12,12áâà1,12áâà2
7700000000001610002
13ª1,13ª2,13ª3,15,15áâà2,17,19,19ª2,21
7700000000001610003
23,23áâà2,23,25áâà1,25áâà2,27áâà1,29
7700000000001610004
31,33,33áâà3
7700000000001610005
22/66,24,24,26ª1,26ª2,28ª1,28ª2,28
7700000000001610006
30,30,34ª1,34ª2,34,34,36ª1,36ª2
7700000000001610007
36ª3,37áâà1,37áâà2,37áâà3,37ª1,37ª2
7700000000001610008
38ª1,38ª2,38,39,39áâà1,39áâà2,40
7700000000001610009
41áâà1,41ª1,41ª2,41ª3,43,43áâà1,45áâà1
7700000000001610010
45ª1,45ª2,47ª1,47ª2,47ª3,49
7700000000001610011
3/2
7700000000001620001
1/1áâà1,1/1áâà2,1/1áâà3,1/1áâà4
7700000000001620002
115280
1/1áâà5,1/1áâà6,1/1áâà7,1/1áâà8
7700000000001620003
1/1áâà9,1/1áâà10,1/1áâà11,1/1áâà12
7700000000001620004
1/1áâà13,1/1áâà14,1/1áâà15,1/1áâà16
7700000000001620005
1/1áâà17,1/1áâà21,1/1áâà22,1/1áâà23
7700000000001620006
1áâà1,5,5ª2,5ª3,5ª4,5ª5,5ª6,9,9,11/1
7700000000001620007
13áâà1,13áâà2,13áâà3
7700000000001620008
2,2ª1,2ª2,2ª2áâà2,2ª3,2ª3áâà2,2,2,2
7700000000001620009
7725
45296559000
4,6,6,6áâà2,6áâà3,6,8,8áâà1
7700000000001620010
18áâà1,22áâà1,22áâà22,22áâà23,22áâà24
7700000000001630001
24áâà8,46áâà1,46áâà2,46áâà3,46áâà4
7700000000001630002
46áâà6,46áâà7,46áâà7,46áâà8,46áâà9
7700000000001630006
46áâà10,46áâà11,46áâà12,46áâà13
7700000000001630007
46áâà14,46áâà4,48áâà2,48áâà3,48áâà4
7700000000001630008
48áâà1,48áâà2,48áâà3,48áâà4
7700000000001630009
48áâà5,48áâà6,48áâà8,48áâà9
7700000000001630010
48áâà10,48áâà11,48áâà12,48áâà13
7700000000001630011
48áâà14,48áâà16,48áâà17,48áâà18
7700000000001630012
50áâà3,50áâà5,50áâà6,50áâà7,50áâà8
7700000000001630013
50áâà9,52áâà1,52áâà2,52áâà3,52áâà4
7700000000001630014
54áâà1,54áâà2,54áâà3,54áâà4,54áâà5
7700000000001630015
54áâà7,54áâà8,54áâà9,54áâà12,54áâà13
7700000000001630016
54áâà14,54áâà15
7700000000001630017
4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000001630004
4áâà6,4áâà7,4áâà1,4áâà2,4áâà3
7700000000001630005
4áâà4,4áâà5,4áâà1,14áâà1,14áâà2
7700000000001630019
14áâà3,16,24ª3
7700000000001630020
2,4,6,6áâà2,6áâà3,6áâà4,6áâà5,6áâà6
7700000000001630021
6áâà7,6áâà8,6áâà9,6áâà10,6áâà11,6áâà12
7700000000001630022
6áâà13,6áâà14,6áâà15,6áâà16,6áâà17
7700000000001630023
6áâà18,6,8,10,10,14ª1,14ª1áâà1
7700000000001630024
14ª1áâà2,16ª1,16,18,18,20,22ª1
7700000000001630025
22ª1áâà1,22ª1áâà2,22áâà1,24,24
7700000000001630026
áâà1,1,1áâà2,3,3áâà2,3ª2,3ª3,5ª1,5ª2
7700000000001630027
5ª3,5ª3áâà2,7ª1,7ª2,7ª3,9ª1,9ª2
7700000000001630028
9ª2áâà4,9ª3,11ª1áâà1,11ª1áâà2,11ª1áâà3
7700000000001630029
11ª2,11ª3,11ª3áâà2,13ª1,13ª2,15ª1,15ª2
7700000000001630030
17áâà7,17ª1,17ª2,19ª1,19ª2,19ª3,27
7700000000001630031
27áâà2,27áâà3,27,29,31áâà4,31ª3
7700000000001630032
31áâà1,31áâà2,31áâà3,31áâà4
7700000000001630033
31áâà5,31áâà6,31áâà7,31áâà8
7700000000001630034
31áâà9,33áâà1,33áâà2,33ª1,33ª2,33áâà1
7700000000001630035
26áâà23,46áâà1,50áâà12,50áâà13,56áâà1
7700000000001630036
109429
56áâà2,56áâà3,56áâà4,56áâà5,56áâà6
7700000000001630037
56áâà8,56áâà10,56áâà11,56áâà12,56áâà13
7700000000001630038
56áâà14,56áâà15,56áâà16,56áâà17
7700000000001630039
56áâà18,56áâà19,56áâà20,56áâà21
7700000000001630040
56áâà22,56áâà24,56áâà25,56áâà26
7700000000001630041
25áâà2,25áâà3,25áâà4,25áâà5,25áâà1
7700000000001630042
26,28,28,30,30
7700000000001630043
28áâà3,28áâà4
7700000000001630003
109451
28,32,34ª1,34ª2,34ª3,34ª4,34,36ª1
7700000000001630044
36ª2,36,36,38áâà1,38ª1,38ª2,38áâà1
7700000000001630045
40áâà1,40ª1,40ª2,42áâà1,42ª1,42ª2,44áâà1
7700000000001630046
7700000000001630018
49ª1,49ª1áâà1,49ª2
7700000000001630047
109469
35áâà2,35áâà3,35áâà4,35áâà5,35ª1,35ª2
7700000000001630048
35ª3,35ª4,35ª5,35,37ª1,37ª2,37,37
7700000000001630049
37,39,39áâà3,39áâà1,43,45ª1,45ª1áâà1
7700000000001630050
45ª1áâà2,45ª2,45ª4,45ª4áâà1,45ª4áâà2
7700000000001630051
25áâà1,51áâà1,51áâà2,51áâà4,51áâà5
7700000000001630052
51áâà6,51áâà7,51áâà11,51áâà12,51
7700000000001630053
51áâà1,51áâà2,51áâà3,51áâà4
7700000000001630054
51áâà5,59,71
7700000000001630055
47ª1,47ª2,53áâà3,55áâà1,57,57áâà1
7700000000001630056
57áâà2,57áâà3,57áâà4,57áâà5,57áâà6
7700000000001630057
57áâà7,57áâà8,57áâà9,57áâà10,57áâà11
7700000000001630058
57,57áâà1,57áâà2,57áâà3,57áâà4
7700000000001630059
57áâà5,59áâà1,59áâà2,59áâà1,59áâà2
7700000000001630060
59áâà3,59áâà4,61áâà1,61áâà2,61áâà3
7700000000001630061
61áâà4,61áâà5,61áâà6,63,63áâà2,63áâà3
7700000000001630062
18,31,31áâà2,33,35,35áâà2,39,39áâà2
7700000000001640001
109388
2ª2áâà2,2ª2áâà3,2ª3,2ª4,2ª4áâà1,2ª5
7700000000001640002
109548
41,41,43,45,47,49,51,51áâà2,51áâà3,53
7700000000001640003
55,55,57ª1,57ª1áâà2,57ª2,59,61,61áâà2
7700000000001640004
63,65,67,69ª1,69ª2,69ª2áâà3,71,73,75
7700000000001640005
75áâà2,77,79,79áâà2,79áâà4,81,81áâà2
7700000000001640006
83áâà1,83áâà2,83áâà3,83áâà4,83áâà5
7700000000001640007
83áâà6,83áâà7,83áâà8,83áâà9,83áâà10
7700000000001640008
83áâà13,83áâà14,83áâà15,83áâà16
7700000000001640009
83áâà17,83áâà18,83áâà19,85
7700000000001640010
1,2áâà1,2áâà2,2áâà3,2ª1,2ª2,2ª2áâà1
7700000000001640011
2ª6,2,2,3,3,4ª1,4ª1áâà1,4ª1áâà2,4ª2
7700000000001640012
4ª2áâà1,4ª2áâà2,5,6ª1,6ª1áâà1,7,8ª1
7700000000001640013
8ª1áâà1,9,11,13,13áâà2,15,17ª1,17ª2
7700000000001640014
1,1áâà2,2,2áâà1,2,3,4,4áâà2,4ª2,5,6,7
7700000000001650001
8,9,9áâà2,10ª1,10,11,12,13,13áâà2,14
7700000000001650002
14,15,15áâà2,17,18ª1,18ª2,18ª3
7700000000001650003
18ª3áâà2,19,19áâà2,20áâà1,20ª1,20,21
7700000000001650004
22,23,23áâà2,26,27,28,28áâà1,29,30áâà1
7700000000001650005
30áâà2,30áâà3,30áâà5,30áâà6,30áâà10
7700000000001650006
30áâà11,30áâà14,30áâà15,30áâà16
7700000000001650007
30áâà17,30áâà25,30áâà26,30áâà27
7700000000001650008
30áâà29,30áâà30,30áâà31,30áâà32
7700000000001650009
30áâà33,30áâà35,30áâà36,30áâà39
7700000000001650010
30áâà40,30áâà41,30áâà46,30áâà47
7700000000001650011
30áâà51,31,33,34,35,40áâà4,40áâà5
7700000000001650012
40áâà6,40áâà10,40áâà11,40áâà12,40áâà13
7700000000001650013
40áâà15
7700000000001650014
1áâà1,1áâà2,1áâà3,1ª1,1ª2,1ª2áâà3,1ª3
7700000000001660001
109044
1ª4,1,3,3áâà2,5,5,7/10
7700000000001660002
2,2,2áâà2,2áâà2,2ª1,2ª2,4,4áâà2
7700000000001660003
4,4,6,6,6áâà2,6,8/12,8
7700000000001660004
13,13áâà1,13áâà2,13áâà3,13áâà4
7700000000001660005
13áâà5,13áâà6,15áâà1,15áâà2,15áâà3
7700000000001660006
15áâà4,15áâà5,15áâà6,15áâà7,15áâà9
7700000000001660007
15áâà10,15áâà11,15áâà12,15áâà13
7700000000001660008
15áâà14,15áâà15,15áâà16,15áâà17
7700000000001660009
15áâà18,15áâà19,15áâà20,15áâà21
7700000000001660010
15áâà22,15áâà23,15áâà27,15áâà28
7700000000001660011
15áâà31,15áâà32,15áâà33
7700000000001660012
12,14,14ª1,14ª1áâà1,14ª1áâà2,14ª1áâà3
7700000000001660013
14ª1áâà4,16,16áâà1,16áâà1,16áâà2,18
7700000000001660014
18áâà3
7700000000001660015
1,2áâà1,2áâà3,2áâà4,2áâà5,2áâà9,2áâà20
7700000000001670001
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000001670002
2áâà6,2áâà7,2áâà8,2áâà9,2áâà10
7700000000001670003
2áâà11,2áâà14,2áâà15,2áâà16
7700000000001670004
2áâà17,2áâà18,2áâà19,2áâà20
7700000000001670005
2áâà21,2áâà22,2áâà23,2áâà24
7700000000001670006
2áâà25,2áâà26,2áâà27,2áâà28
7700000000001670007
2áâà29,2áâà30,2áâà31,3áâà1,3áâà2
7700000000001670008
3áâà1,3áâà2,3áâà3,3áâà6,3áâà7
7700000000001670009
3áâà8,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5
7700000000001670010
8áâà6,8áâà7,8áâà8,8áâà9,8áâà10,8áâà11
7700000000001670011
8áâà13,8áâà14,8áâà15,8áâà16,8áâà1
7700000000001670012
8áâà2,8áâà3,8áâà4,8áâà5,8áâà6
7700000000001670013
11áâà1,12áâà1,12áâà2,12áâà3,12áâà4
7700000000001670014
12áâà5,12áâà6,12áâà7,15áâà1,35áâà1
7700000000001670015
35áâà2,35áâà3,35áâà4,35áâà5,35áâà7
7700000000001670016
35áâà8,35áâà9,35áâà10,35áâà11,35áâà12
7700000000001670017
37,37áâà2,37áâà3
7700000000001670018
4áâà1,4áâà2,5/9,6áâà3,6áâà4,6áâà5,8/29
7700000000001680001
8/29áâà3,8/29áâà4,11/31
7700000000001680002
14áâà1,14áâà2,15,15áâà1,15áâà2,16áâà2
7700000000001690001
21,25
7700000000001690002
7700000000001690003
7áâà7,7áâà8,7áâà10,7áâà11,7áâà12
7700000000001690004
7áâà13,7áâà14,7áâà15,7áâà16,7áâà17
7700000000001690005
7áâà18,7áâà19,7áâà20,7áâà21,7áâà22
7700000000001690006
13áâà1
7700000000001690007
áâà,1áâà2,2,2áâà1,2áâà2,2áâà3
7700000000001700001
2áâà1,2áâà2,2áâà3,2áâà4,5áâà19
7700000000001700002
5áâà27,5áâà28,5áâà29,5áâà30,5áâà38
7700000000001700003
5áâà42,5áâà1,5áâà2,5áâà3,5áâà6
7700000000001700004
5áâà8,5áâà9,5áâà10,8,9,10áâà1
7700000000001700005
10áâà2,10áâà3,10áâà4,10áâà9,10áâà13
7700000000001700006
10áâà17,10,12áâà1,12ª2,12áâà1
7700000000001700007
12áâà2,13áâà1,13áâà3,14áâà1,15,15áâà5
7700000000001700008
16,18,20ª1,20ª2,22,22áâà1,22áâà1
7700000000001700009
22áâà2,26áâà1,26áâà1,26áâà2,26áâà12
7700000000001700010
26áâà14,26áâà17,26áâà20,26áâà21
7700000000001700011
26áâà23,26áâà24,26áâà25,26áâà26
7700000000001700012
26áâà31,26áâà32,26áâà33,26áâà34
7700000000001700013
26áâà35,26áâà36,26áâà37
7700000000001700014
3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,3áâà6
7700000000001700015
3áâà7,3áâà8,3áâà9,3áâà11,3áâà12,3áâà13
7700000000001700016
3áâà14,3áâà15,3áâà16,3áâà17,3áâà18
7700000000001700017
3áâà19,3áâà25,3áâà26,3áâà27,3áâà1
7700000000001700018
3áâà2,3áâà4,3áâà5,3áâà6,3áâà7
7700000000001700019
4áâà1,9áâà1,9áâà2,9áâà3,9áâà5,9áâà6
7700000000001700020
9áâà7,11áâà1,11áâà2
7700000000001700021
áâà1,áâà2,áâà3,áâà4,áâà5,1,2,3,4,4,5
7700000000001710001
6,7,8,9,10,10áâà2,12,13,14,15
7700000000001710002
áâà10,áâà11,áâà12,áâà13,áâà14,áâà15
7700000000001720001
áâà16,áâà17,áâà18,áâà19,áâà20,1,1áâà1
7700000000001720002
1áâà2,1áâà3,1áâà4,1áâà5,1áâà6,1áâà7
7700000000001720003
1áâà8,1áâà9,1áâà11,1áâà12,1áâà14
7700000000001720004
1áâà16,1áâà17,1áâà22,1áâà39,1áâà51
7700000000001720005
1áâà52,1áâà53,1áâà54,1áâà55,1áâà56
7700000000001720006
1áâà57,1áâà58,1áâà59,1áâà60,1áâà61
7700000000001720007
1áâà62,1áâà63,1áâà64,1áâà65,1áâà66
7700000000001720008
1áâà67,1áâà68,1áâà69,1áâà70,1áâà71
7700000000001720009
1áâà72,1áâà75,1áâà76,1áâà77,1áâà78
7700000000001720010
1áâà79,1áâà80,1áâà81,1áâà82,1áâà110
7700000000001720011
1áâà113,1áâà125,1áâà126,1áâà127
7700000000001720012
1áâà150,1áâà244,1áâà245,1áâà246
7700000000001720013
1áâà248,1áâà249,1áâà354,1áâà371
7700000000001720014
1áâà372,1áâà400,1ª2,1ª3,1ª5,1ª10,1ª11
7700000000001720015
1,2,3,4,4áâà1,5,6,7,8,9,10,10áâà1,11
7700000000001730001
12,13,13ª2,15,16,17,18,19,20,21,23,24
7700000000001730002
25,25áâà2,25áâà3,25,26áâà2,26áâà6
7700000000001730003
26áâà7,26áâà8,26áâà9,26áâà10,26áâà13
7700000000001730004
27,27áâà3,29,29áâà1
7700000000001730005
1,1áâà4,2,3,3áâà3,4,5,6,6áâà3,7,7áâà2
7700000000001740001
8,9,10,11,12,13,14,15,16
7700000000001740002
1áâà1,1áâà2,1áâà3,1áâà4,1,2,3,4,5,6,7
7700000000001750001
109649
8,8áâà2,9,10,11,11áâà2,12,12áâà2,13
7700000000001750002
14áâà1,14áâà9,15,15áâà2,16,16áâà2,17
7700000000001750003
19,20,20áâà4,21,23,23áâà2,24,25,26,28
7700000000001750004
28ª2,29,30
7700000000001750005
2,4,6áâà2,8,8áâà1,8áâà2,12
7700000000001760001
4/117,6,8,10,10,12,14,16,20/1
7700000000001770001
21,23,25ª2,25ª2áâà1,27/13,28/15,29,30
7700000000001770002
31,31áâà1,32,33,34,34áâà2,34áâà1
7700000000001770003
34áâà2,34áâà4,35,38/20,44/13,45/11
7700000000001770004
46,48,48áâà1,48áâà2
7700000000001770005
1,5/115,7áâà2,7áâà3,7ª1,9,9áâà2,11,13
7700000000001770006
13áâà2,15/17,17,17áâà2,48áâà1,61,66
7700000000001770007
71áâà1
7700000000001770008
76,78,78áâà1
7700000000001770009
47,51áâà1,51áâà8,51ª2,51ª3,51ª4
7700000000001770010
51ª4áâà9,51ª5,52,53,55,56,57ª1,57ª2
7700000000001770011
57ª2áâà2,57ª3,57,58,58áâà2,58,59,60
7700000000001770012
60áâà2,60,63,63áâà2,65/18ª1,65/18ª2
7700000000001770013
70áâà1,70áâà2,70áâà3,70áâà4,70áâà5
7700000000001770014
70áâà6,72ª1,72ª1áâà1,72ª3,74ª2,74ª2áâà1
7700000000001770015
18/18,20,20ª2,20ª2áâà2,22,22áâà2,24
7700000000001780001
24áâà2,27,33,34,34ª2,34ª2áâà2,35,36
7700000000001780002
36áâà2,37,38,39,39áâà2,39,40,40áâà1
7700000000001780003
42,42áâà2,44,46,49/17,51,51áâà1,53
7700000000001780004
53áâà2,53áâà1,55,55áâà1,55áâà2
7700000000001780005
1ª1,1ª1áâà2,1ª2,3ª1,3ª2,3ª3,5áâà1
7700000000001780006
5áâà2,5áâà3,7/1áâà1,7/1áâà2,9/2,11,13
7700000000001780007
13áâà2,13áâà3,13áâà4,13áâà5,13áâà9
7700000000001780008
13áâà10,13ª2,19ª1,19ª2,21ª1,21ª2,23ª1
7700000000001780009
23ª1áâà1,23ª2,25,25áâà1
7700000000001780010
2ª1,2ª1áâà2,2ª3,2ª3áâà2,2ª4,4,6,6áâà2
7700000000001780011
8áâà1,8áâà2,8áâà3,8áâà4,10,12,14áâà6
7700000000001780012
14ª1,14ª2,14ª3,16/19,16
7700000000001780013
9,11,13,15,17ª1,19áâà3,19ª1,19ª2,21
7700000000001800001
115193
26áâà1,26áâà2,26áâà3,26áâà4,27áâà7
7700000000001800002
27áâà8,27ª1,27ª2,27ª2áâà1,27ª2áâà2,28
7700000000001800003
30ª1,31,32ª1,33,34ª1,35
7700000000001800004
1,1,3
7700000000001800006
12,12áâà2,14,14ª1,14ª1áâà2,14ª1áâà3,16
7700000000001800007
18ª1,18ª2,18ª2áâà3,20,22áâà3,22ª1,22ª2
7700000000001800008
24ª1,24ª1áâà2
7700000000001800009
4,6,8,8áâà2,8ª2,10,10ª1
7700000000001800010
3ª1,3ª2,4,5,5áâà2,6,6áâà2,6áâà3,6áâà4
7700000000001810001
6áâà1,8,8áâà1,10,11áâà1,11ª2,13,15
7700000000001810002
15ª2,16,17,18ª1,18ª1áâà2,18ª2,19,21,23
7700000000001810003
24,25ª2,26,27,27ª2,28,29,29,31
7700000000001810004
3áâà18,4ª1,4ª2,5áâà1,5áâà2,5áâà3
7700000000001820001
5áâà4,5áâà5,5áâà6,5áâà7,5áâà1,5áâà2
7700000000001820002
5áâà3,5áâà4,5,7,8ª1,8ª2,10ª1,10ª2
7700000000001820003
10ª2áâà1,10ª2áâà2,11,13/4,14/1,15áâà1
7700000000001820004
15áâà2,15áâà3,15áâà4,15,15áâà2
7700000000001820005
15áâà3,15áâà5,15áâà9,15áâà10
7700000000001820006
3,3áâà2
7700000000001830001
4,12áâà1,12áâà2,12ª3,12ª3áâà2,14áâà1
7700000000001840001
14áâà2,16/2,18/1,20,22,22ª2,23,24
7700000000001840002
24áâà3,25,26/2,27,29
7700000000001840003
1,3,4,5,6,6,6,7,8,10,11,12,13,14,15
7700000000001850001
16,16,17,18,18áâà3,18ª1,19,20/1áâà1
7700000000001850002
21,22áâà1,22áâà2,22áâà3,23,25,26/1,27
7700000000001850003
28,28áâà2,28áâà3,28áâà5,29,30,31,32,33
7700000000001850004
34áâà1,34áâà2,34áâà3,34áâà4,34áâà5
7700000000001850005
34áâà6,34áâà7,34áâà8,34áâà9,34áâà11
7700000000001850006
34áâà11,34áâà12,34áâà13,34áâà15,34
7700000000001850007
35,36,37,38,39,41,43,45,47,49,51,53
7700000000001850008
6,7áâà1,7áâà2,7áâà3,7áâà4,7,8,9,10/2
7700000000001860001
11,12/3,13,13áâà3,14,20,20áâà2,22,24
7700000000001860002
26áâà1,26áâà2,26áâà3
7700000000001860003
2,4,5,5,6,7,8,9,10,11,12/6,13,14/9,15
7700000000001870001
16,17/4,18/10,19/7,21,22,24,26,27,29
7700000000001870002
31,33,33áâà1
7700000000001870003
1,2,2áâà4,2áâà5,2áâà6,3/14,5,6,7,8áâà1
7700000000001880001
8áâà2,8áâà3,20áâà1,20áâà2,20áâà3
7700000000001880002
2,2áâà2,4/16,5,6,7/25,8/23,9/20,11,12
7700000000001890001
13/4
7700000000001890002
15áâà2,15áâà15,15áâà17,15áâà25
7700000000001900001
15áâà27,15áâà53,15áâà53
7700000000001900002
15áâà112
7700000000001900003
áâà1,5,8,10,11,12áâà1,13/1,14,15áâà1
7700000000001900004
15áâà3,15áâà4,15áâà5,15áâà6,15áâà7
7700000000001900005
15áâà8,15áâà9,15áâà10,15áâà11,15áâà12
7700000000001900006
15áâà13,15áâà14,15áâà15,15áâà15
7700000000001900007
15áâà16,15áâà18,15áâà19,15áâà20
7700000000001900008
15áâà21,15áâà22,15áâà23,15áâà24
7700000000001900009
15áâà26,15áâà28,15áâà29,15áâà30
7700000000001900010
15áâà31,15áâà32,15áâà33,15áâà34
7700000000001900011
15áâà35,15áâà36,15áâà37,15áâà38
7700000000001900012
15áâà39,15áâà40,15áâà41,15áâà42
7700000000001900013
15áâà43,15áâà44,15áâà45,15áâà46
7700000000001900014
15áâà47,15áâà48,15áâà49,15áâà50
7700000000001900015
15áâà51,15áâà52,15áâà54,15áâà54
7700000000001900016
15áâà55,15áâà56,15áâà56,15áâà57
7700000000001900017
15áâà57,15áâà58,15áâà59,15áâà60
7700000000001900018
15áâà61,15áâà62,15áâà63,15áâà64
7700000000001900019
15áâà65,15áâà66,15áâà67,15áâà68
7700000000001900020
15áâà69,15áâà70,15áâà71,15áâà72
7700000000001900021
15áâà73,15áâà74,15áâà75,15áâà76
7700000000001900022
15áâà77,15áâà78,15áâà79,15áâà80
7700000000001900023
15áâà81,15áâà82,15áâà83,15áâà84
7700000000001900024
15áâà85,15áâà86,15áâà87,15áâà88
7700000000001900025
15áâà89,15áâà90,15áâà91,15áâà92
7700000000001900026
15áâà93,15áâà94,15áâà95,15áâà96
7700000000001900027
15áâà97,15áâà98,15áâà99,15áâà100
7700000000001900028
15áâà101,15áâà102,15áâà103,15áâà104
7700000000001900029
15áâà105,15áâà106,15áâà107,15áâà108
7700000000001900030
15áâà109,15áâà110,15áâà111,15áâà113
7700000000001900031
15áâà114,15áâà115,15áâà116,15áâà117
7700000000001900032
15áâà118,15áâà119,15áâà120,15áâà121
7700000000001900033
15áâà122,15áâà123,15áâà125,15áâà126
7700000000001900034
15áâà127,15áâà128,15áâà129,15áâà130
7700000000001900035
15áâà131,15áâà132,15áâà133,15áâà134
7700000000001900036
15áâà135,15áâà136,15áâà137,15áâà138
7700000000001900037
15áâà139,15áâà140,15áâà141,15áâà142
7700000000001900038
15áâà143,15áâà144,15áâà145,15áâà146
7700000000001900039
15áâà147,15áâà148,15áâà149,15áâà150
7700000000001900040
15áâà151,15áâà152,15áâà153,15áâà154
7700000000001900041
15áâà155,15áâà156,15áâà157,15áâà158
7700000000001900042
15áâà159,15áâà160,15áâà161,15áâà162
7700000000001900043
15áâà163,15áâà164,15áâà165,15áâà166
7700000000001900044
15áâà167,15áâà168,15áâà169,15áâà170
7700000000001900045
15áâà171,15áâà172,15áâà173,15áâà174
7700000000001900046
15áâà175,15áâà176,15áâà177,15áâà178
7700000000001900047
15áâà179,15áâà180,15áâà181,15áâà182
7700000000001900048
15áâà183,15áâà184,15áâà185,15áâà187
7700000000001900049
15áâà188,15áâà189,15áâà190,15áâà191
7700000000001900050
15áâà192,15áâà193,15áâà194,15áâà195
7700000000001900051
15áâà195,15áâà196,15áâà197,15áâà198
7700000000001900052
15áâà199,15áâà202,15áâà203,15áâà204
7700000000001900053
15áâà205,15áâà206,15áâà207,15áâà208
7700000000001900054
15áâà209,15áâà210,15áâà211,15áâà212
7700000000001900055
7700000000001910001
4,6,8,12/23,14,16,16áâà2,18,20,20ª2
7700000000001920001
3ª1,3ª2,5,11,11áâà1,13,13áâà2,13áâà3
7700000000001920002
1áâà1,1áâà2,1áâà6,1áâà8,2áâà1,2áâà2
7700000000001930001
2áâà3,4áâà2,4áâà3,4áâà4,6,7áâà1,7áâà2
7700000000001930002
8/2áâà1,10/1
7700000000001930003
2,3,3áâà3,3ª2,3ª3,3ª4,4,5,6,7
7700000000001940001
11ª2,11ª3,13,13áâà1,13áâà4,13ª2,13ª3
7700000000001940002
13ª3áâà1,13ª5,17/14,19,19ª2,21,22,22
7700000000001940003
24,24áâà2,26ª1,26ª2,28,30,32,32áâà2
7700000000001940004
18ª1,18ª1áâà2,18ª2,20,20áâà4
7700000000001940005
2/123,3,4,4áâà2,5,6,6áâà2,7,7áâà2,8,10
7700000000001950001
3/5,4ª1,4ª2,4ª3,4ª4,5,5áâà3,5áâà4,6
7700000000001960001
6,6áâà1,6áâà2,7,7,10,12áâà4,12ª2
7700000000001960002
2/7ª1,2/7ª2
7700000000001960003
14áâà1
7700000000001970001
7700000000001970002
17áâà1,17áâà2,19,21,23,25áâà1,25áâà2
7700000000001970003
25áâà3,25áâà4,25áâà5,25áâà7,27áâà1
7700000000001970004
27áâà2,27áâà3,27áâà4,27áâà5,27áâà6
7700000000001970005
40áâà1,40áâà2,40áâà3
7700000000001970006
6,6áâà2,8áâà1,12áâà1,12áâà2
7700000000001970007
3,3áâà3,5,7,7áâà1,7áâà2,7áâà4,7áâà5
7700000000001970008
7ª1áâà1,8áâà2,8áâà5,8áâà7,8áâà8,8áâà9
7700000000001970009
8áâà10,8áâà11,9,9áâà5,9,9,11,11áâà3
7700000000001970010
11áâà5,15áâà1
7700000000001970012
5,5áâà1,7áâà1,7áâà2
7700000000001980001
14,15/10,16,16,17,17áâà1,18,18áâà2
7700000000001980002
19,21,21áâà1,22,23,24,24áâà2,25,27
7700000000001980003
2áâà1,2áâà4,4áâà1,4áâà2
7700000000001980004
1,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,3áâà6
7700000000001980005
3áâà7,3áâà8,3áâà9,3áâà10,3áâà11,3áâà12
7700000000001980006
3áâà13,3áâà14,3áâà15,3áâà16,3áâà17
7700000000001980007
3áâà18,3áâà19,3áâà20
7700000000001980008
13,13áâà2,13áâà3,15,17,19
7700000000001990001
1,1áâà2,1ª2,3,5,7,9,11,11áâà2
7700000000001990002
2,4,4áâà2,4,6,12,12ª1,14,16,16áâà2,18
7700000000001990003
7700000000001990004
8áâà1,9,10áâà1,10áâà2,11áâà1,11áâà2
7700000000002000001
11áâà3,14áâà1,16áâà1,16áâà2,20ª1
7700000000002000002
20áâà2,20áâà3,20áâà1,20áâà2
7700000000002000003
20áâà3,20áâà4,20áâà6,20áâà7
7700000000002000004
20áâà8,20,20áâà1,20áâà2,20áâà3
7700000000002000005
20,20áâà1,20áâà1,20áâà2,20áâà3
7700000000002000006
20áâà4,27,27áâà2,27áâà12,47áâà2,75
7700000000002000007
19áâà6,19áâà7,19áâà8,19áâà9
7700000000002000008
15,15áâà1,19áâà1,19áâà2,19áâà1
7700000000002000009
19áâà2,19áâà3,19áâà4,19áâà5
7700000000002000010
19áâà12,19áâà13,19áâà14,19áâà1
7700000000002000011
19áâà2,21,21,21áâà1,21áâà2,23
7700000000002000012
27áâà1,27áâà3,27áâà4,27áâà5,27áâà6
7700000000002000013
27áâà7,27áâà9,27áâà11,27áâà13,27áâà14
7700000000002000014
27áâà15,27áâà16,27áâà19,27áâà20
7700000000002000015
27áâà23,27áâà1,27áâà2,27áâà3
7700000000002000016
27áâà4,27áâà5,29áâà1,29áâà2,29áâà3
7700000000002000017
29áâà4,29áâà5,29áâà6,29áâà12,29áâà15
7700000000002000018
29áâà16,29áâà17,29áâà21,29áâà1
7700000000002000019
29áâà2,29áâà3,29áâà4,29áâà5
7700000000002000020
29áâà6,29áâà7,29áâà8,29áâà9
7700000000002000021
29áâà10,29áâà11,29áâà12,29áâà13
7700000000002000022
29áâà14,29áâà15,31áâà1,31áâà2,31áâà3
7700000000002000023
31áâà4,31áâà5,31,31áâà1,35áâà1
7700000000002000024
35áâà2,37áâà1,37áâà2,37áâà3,37áâà4
7700000000002000025
37áâà5,47,134áâà1,134áâà2,134áâà3
7700000000002000026
134áâà4,134áâà5,134áâà6,134áâà7
7700000000002000027
134áâà15,134áâà16,134áâà17,134áâà19
7700000000002000028
134áâà34,134áâà35,134áâà36,134áâà39
7700000000002000029
134áâà40,134áâà41,134áâà42,134áâà43
7700000000002000030
134áâà44,134áâà45,134áâà47,134áâà48
7700000000002000031
134áâà49,134áâà50,134áâà51,134áâà52
7700000000002000032
1áâà1,1áâà2,1áâà4,1áâà5,1áâà6,1áâà7
7700000000002010001
1áâà8,1áâà9,5áâà1,5áâà2,5áâà3,5áâà4
7700000000002010002
5áâà6,5áâà8,5áâà9,5áâà10,5áâà11,5áâà14
7700000000002010003
7700000000002010004
4ª1,4ª2,6,6áâà1,6áâà2,6áâà2,6áâà3
7700000000002010005
7700000000002010006
6áâà9,6áâà10,6áâà11,6áâà12,8,10
7700000000002010007
10áâà1,10,10áâà2,12áâà1,12áâà2
7700000000002010008
12áâà4,12áâà5,12áâà6,12áâà14,12
7700000000002010009
28,28áâà1,30ª1,30ª1áâà1,30ª1áâà2,30ª2
7700000000002020001
32,34,34,34,36,38
7700000000002020002
3,3áâà1,3áâà2,4,4áâà2,4áâà3,5ª1,5ª2
7700000000002020003
6áâà1,6áâà2,7,8,8áâà2,10,12,12áâà2,12
7700000000002020004
14,14áâà2,15,16,16ª2,17,18/37,19,21
7700000000002020005
22/31,24ª1,24ª1áâà1,24ª2
7700000000002020006
25ª1,25ª1áâà1,25ª2,25ª3,27,27áâà1
7700000000002020007
32,34,36,36,40,42,42áâà2,42,44,46
7700000000002030001
46ª2,48,48áâà2
7700000000002030002
23,25,27,27áâà2,27ª1,29,29áâà2,31,33
7700000000002030003
35,35áâà1,39,41áâà8,41ª1,41ª2,41ª3
7700000000002030004
41ª4,41ª7,43,43,45,47,49,49,51,53
7700000000002030005
53áâà2,55,55áâà2,57,57áâà2,57áâà3,57ª1
7700000000002030006
57ª2
7700000000002030007
1,1áâà2,2,2áâà2,3,4,5,5áâà2,5áâà3
7700000000002030008
5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000002030009
6áâà1,6áâà2,7,8,9,9áâà3,10,10áâà2,10ª1
7700000000002030010
10ª2áâà2,11,12,13,13,14,15,17,17,19
7700000000002030011
19,20ª1,20ª2,20ª3,20ª3áâà2,21,21,22
7700000000002030012
24,26,28,30
7700000000002030013
1áâà2,2,2ª2,3,3áâà1,4,4áâà3,4áâà4,4ª2
7700000000002050001
4ª3,4,5,6,6ª2,7áâà1,7áâà2,7áâà3,8,9
7700000000002050002
10,11,12,13,14,14áâà1,15,15áâà1,16
7700000000002050003
16áâà1,16áâà2,17,18ª1,18ª2,19,20
7700000000002050004
1,1ª2,2,3,5,6,6áâà1,7,8,9,11,13,13áâà4
7700000000002060001
15,15,17,17áâà4,18,19,21,23,25,26
7700000000002060002
27ª1,27ª1áâà2,27ª1áâà3,27ª2,27ª3,27ª4
7700000000002060003
29,31,33,33áâà2
7700000000002060004
17,23áâà3,23ª1,23ª2,25,25áâà1,29
7700000000002070001
109383
29áâà1,29áâà2,29áâà3,29,29áâà1,35ª1
7700000000002070002
35ª2,35ª2áâà3,35ª2áâà4,35,45,45áâà3
7700000000002070003
45áâà5,45áâà6,45áâà7,45áâà8,45áâà13
7700000000002070004
45ª2,45áâà1,45áâà2,45áâà3,45áâà4
7700000000002070005
45áâà5,47áâà1,47áâà2,52,54,54áâà2
7700000000002070006
56,58,58áâà2,58áâà3,58áâà4,60,62
7700000000002070007
62áâà2,64,66,68áâà1,72áâà1,72áâà2
7700000000002070008
72áâà3,72áâà4
7700000000002070009
9,9ª1,9ª1áâà6,9ª2,9ª3,11,13,13áâà1
7700000000002070010
13áâà2,15,15áâà1,15áâà2,34,34áâà2
7700000000002070011
34áâà3,36,36áâà2,38,40,42,44,46,48,50
7700000000002070012
1,1áâà2,1áâà1,1áâà5,1áâà6,2áâà2,2ª1
7700000000002070013
3áâà1,3áâà2,3áâà3,4,5áâà1,6,8,10,12,14
7700000000002070014
16,16áâà1,18,18ª2,20,20áâà2,20áâà4,24
7700000000002070015
26,28,30,30áâà2,30áâà3,32,32áâà1
7700000000002070016
1ª1,1ª1áâà2,1/2,1/2áâà2,7,7áâà1,7áâà2
7700000000002090001
9/1,11/2,11/2áâà2,13,13áâà1,13ª1
7700000000002090002
13ª1áâà2,15/7
7700000000002090003
2,2áâà2,4,6/5,6/5áâà1
7700000000002090004
19,19áâà1,19áâà2,21,21áâà2
7700000000002090005
7ª1,7ª2,7ª2áâà1,7ª2áâà2,7áâà1,7áâà2
7700000000002100001
7áâà3,7áâà4,9,9áâà2,9ª2,9ª2áâà2
7700000000002100002
9áâà1,9áâà2,11/31,11/31áâà4
7700000000002100003
3,13áâà3,13ª1,13ª2,15,15áâà2,17ª1,17ª2
7700000000002100004
7700000000002100005
8,8ª2,10,10ª2,12,12áâà2,12áâà3,12ª2
7700000000002100006
12,14,14ª1,14áâà1,14áâà2,14áâà3
7700000000002100007
14,16,16áâà2,16áâà3,16ª1,16ª2,16
7700000000002100008
16áâà2,16áâà3,16áâà4,16áâà5
7700000000002100009
16áâà6,16áâà7,16áâà8,18,18,20ª1
7700000000002100010
20ª1áâà2,20ª2,20ª3,20ª4,22ª1,22ª2,22ª3
7700000000002100011
22ª4,24ª1,24ª1áâà2,24ª2,24ª3,26ª1,26ª2
7700000000002100012
26ª2áâà2,26ª3,26ª4,26,28
7700000000002100013
1áâà1,1áâà3,1áâà5,1áâà11,1áâà14,2áâà1
7700000000002110001
2áâà2,2áâà3,2,3,3áâà2,3áâà3,4ª1,4ª2
7700000000002110002
4ª3,4ª3áâà2,4ª4,6,6áâà2,7,8,8áâà2,8ª1
7700000000002110003
8,8áâà1,8áâà2,8áâà3,10áâà1,10áâà2
7700000000002110004
10ª1,10ª2,10ª6,10áâà1,10áâà2,10áâà3
7700000000002110005
10áâà4,10áâà5,10áâà6,10áâà7
7700000000002110006
10áâà8,10áâà9,10áâà3,12,14,14áâà3
7700000000002110007
14áâà4,16,16ª1,16ª2,18ª1,18ª2,18ª3
7700000000002110008
18ª4,19,19áâà2,20,20áâà2,25/14,27,29
7700000000002110009
31,31,39,43,45,47,51áâà1,51áâà2,53ª1
7700000000002110010
53ª2,55,55áâà1,55áâà2
7700000000002110011
37,37áâà1,41,41áâà1,49,49áâà1,51áâà5
7700000000002110012
55áâà3
7700000000002110013
19,19áâà2,20,20áâà2,21,22,23,23ª1,25
7700000000002120001
36áâà2,36áâà3,40
7700000000002120002
3,4ª1,4ª1áâà2,4ª2,4ª2áâà2,4ª3,5,5áâà2
7700000000002120003
5áâà3,6,7áâà1,7áâà2,8,9/11áâà1,9/11
7700000000002120004
11,12/10,12/10áâà2,13,14ª1,14ª2,15
7700000000002120005
16ª1,16ª2,18/13
7700000000002120006
3,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,3áâà6
7700000000002130001
3áâà7,3áâà8,3áâà15,3áâà16,3áâà20
7700000000002130002
3áâà21,3áâà22,3áâà23,3áâà26,3áâà27,3
7700000000002130003
3,4,5,6,7,7áâà1,7ª2,7ª2áâà1,7ª2áâà2,8
7700000000002140001
10,11,11áâà2,11áâà3,11áâà4,11,14,15
7700000000002140002
15áâà4,16/47,16/47ª1,17,18,22/10
7700000000002140003
23áâà2,23ª2,23,24,25,25ª1,25ª2,25ª3
7700000000002140004
26,27,28,29,30
7700000000002140005
1,1áâà1,2,2áâà4,4áâà1,4áâà2,4áâà3
7700000000002150001
6áâà1,6áâà2,7,8,8áâà2,9,9ª2,10/21,11ª1
7700000000002150002
11ª2,11ª3,12,12áâà3,14,14,16,17,18/25
7700000000002150003
19,21,22,23,23áâà2,25,27,29
7700000000002150004
9,9áâà2,9áâà3,11
7700000000002160001
3,3,4,5/8,6,8,8áâà1,8,12/9,13,16,16
7700000000002160002
1,3/1,3,4,4áâà1,4ª1,5,6/19,7ª1,7ª2
7700000000002170001
7ª3,7ª4,9,9áâà1,11,12ª1,12ª2,12ª3,13
7700000000002170002
13,14,14ª1,14ª2,16,16áâà1,16ª2,18/15
7700000000002170003
20,20áâà2,22
7700000000002170004
12áâà2
7700000000002170005
1,1ª1,2áâà1,2áâà2,2áâà3,2áâà4,2ª1,2ª2
7700000000002180001
2ª2áâà2,2ª2áâà3,3,3,5,5ª3,5,5,7,7
7700000000002180002
7,7,8,8ª2áâà1,9,9,9áâà2,9,10,11
7700000000002180003
11áâà2,12,12ª2,12ª2áâà2,13ª1,13ª2,13
7700000000002180004
14,14áâà2,14ª2,15,16áâà5,16ª1,16ª2
7700000000002180005
16ª4,16ª5,18,18ª3,19
7700000000002180006
2áâà1,3,4,18áâà1,18áâà2,23,23áâà1
7700000000002190001
23áâà2,23áâà3,23áâà4,23áâà5,23áâà6
7700000000002190002
23áâà7,23áâà8,23áâà9,23áâà10,23áâà12
7700000000002190003
23áâà15,23áâà16,23áâà17,24,24áâà2,28
7700000000002190004
30,33,33áâà2,33áâà3,37áâà3,39áâà1,39áâà2
7700000000002190005
1áâà1,1áâà1,1áâà2,1áâà2,1áâà3,1áâà4
7700000000002200001
1áâà5,1áâà6,1áâà7,1áâà8,1áâà9,1áâà10
7700000000002200002
1áâà11,1áâà12,1áâà13,1áâà14,1áâà15
7700000000002200003
1áâà16,1áâà17,1áâà18,1áâà19,1áâà20
7700000000002200004
1áâà21,1áâà22,1áâà23,1áâà24,1áâà25
7700000000002200005
1áâà26,1áâà27,1áâà28,1áâà29,1áâà30
7700000000002200006
1áâà31,1áâà32,1áâà33,1áâà34,1áâà35
7700000000002200007
1áâà36,1áâà37,1áâà38,1áâà39,1áâà40
7700000000002200008
1áâà41,1áâà70,1áâà71,1áâà73,1áâà76
7700000000002200009
1áâà77,1áâà78,1áâà79,1áâà80,1ª3
7700000000002200010
1ª3áâà1,1ª4,1áâà1,1áâà1,2áâà3,2ª1
7700000000002200011
2ª2,4ª1,4ª1áâà3,4ª2,6,8,8,10,12ª1
7700000000002200012
12ª2,12ª2áâà1,14ª1,14ª1áâà2,14ª2,16
7700000000002200013
11,12,13,13,14,14áâà1,15,15,15áâà2
7700000000002210001
16,16áâà2,16,17,17áâà1,18,18áâà1,18
7700000000002210002
18áâà1,19ª1,19ª2,19ª2áâà2,20,20áâà2
7700000000002210003
20áâà2,20áâà4,21ª1,21ª2,22ª1,22ª2
7700000000002210004
23ª1,23ª2,23ª2áâà1,23ª3,24ª1,24ª2
7700000000002210005
24ª2áâà3,25ª1,25ª2,26áâà1,26áâà2
7700000000002210006
26áâà3,26áâà4,26áâà6,26áâà7,26áâà8
7700000000002210007
7700000000002210008
26áâà15,26áâà16,26áâà19,27ª1,27ª2
7700000000002210009
27ª2áâà5,27ª2áâà6,28ª1,28ª2,28ª3,29
7700000000002210010
30ª1,30ª2,30ª3,31,31áâà1,32ª1,32ª1áâà1
7700000000002210011
32ª1áâà2,32ª2,32,33,34,35/20,36
7700000000002210012
36áâà1,36ª1
7700000000002210013
1/17,2/1,2,3,3áâà2,4,4ª2,4ª3,4,4,5
7700000000002210014
5áâà3,5ª2,5,6,6áâà2,6,6,7,8,8,9
7700000000002210015
9áâà1,9ª2,10,10áâà1
7700000000002210016
2,2áâà2,4,4,6,7,8,9,9,10,11,11áâà2
7700000000002220001
12,12
7700000000002220003
7700000000002220002
7700000000002230001
1áâà7,2áâà1,2áâà2,2áâà3,2áâà5,2áâà6
7700000000002230002
2áâà7,2áâà8,2áâà10,2áâà11,2áâà11
7700000000002230003
2áâà12,2áâà13,2áâà14,2áâà15,2áâà18
7700000000002230004
2áâà18,2áâà19,2áâà20,2áâà21,2áâà22
7700000000002230005
2áâà22,2áâà23,2áâà25,2áâà25,2áâà27
7700000000002230006
2áâà30,2áâà31,2áâà33,2áâà35,2áâà36
7700000000002230007
2áâà37,2áâà38,2áâà40,2áâà42,2áâà43
7700000000002230008
2áâà44,2áâà46,2áâà47,2áâà48,2áâà49
7700000000002230009
2áâà50,2áâà52,2áâà52,2áâà53,2áâà54
7700000000002230010
2áâà55,2áâà56,2áâà60,2áâà61,2áâà62
7700000000002230011
2áâà63,2áâà65,2áâà66,2áâà67,2áâà68
7700000000002230012
2áâà69,2áâà70,2áâà72,2áâà73,2áâà74
7700000000002230013
2áâà76,2áâà78,2áâà79,2áâà80,2áâà81
7700000000002230014
2áâà82,2áâà83,2áâà84,2áâà85,2áâà86
7700000000002230015
2áâà88,2áâà90,2áâà91,2áâà94,2áâà96
7700000000002230016
2áâà96,2áâà98,2áâà99,2áâà100,2áâà101
7700000000002230017
2áâà102,2áâà104,2áâà108,2áâà110
7700000000002230018
2áâà115,2áâà119,2áâà127,2áâà128
7700000000002230019
2áâà132,2áâà135,2áâà141,2áâà145
7700000000002230020
2áâà146,2áâà147,2áâà148,2áâà149
7700000000002230021
2áâà150,2áâà151,2áâà1,2áâà2,2áâà2
7700000000002230022
3áâà1,3áâà2,3áâà5,3áâà6,4,6áâà1,8áâà3
7700000000002230023
8áâà4,8áâà7,12áâà1,12áâà2,12áâà3
7700000000002230024
12áâà4,12áâà5,12áâà6,12áâà9,14áâà1
7700000000002230025
14áâà2,14áâà3,14áâà4,14áâà5,14áâà6
7700000000002230026
17áâà1,17áâà2,17áâà3,17áâà4,17áâà5
7700000000002230027
17áâà6,17áâà7,17áâà8,18/1áâà1,18/1áâà3
7700000000002230028
18/1áâà4,18/1áâà5,18/1áâà6,18/1áâà7
7700000000002230029
18/1áâà8,18/1áâà9,18/1áâà10,18/1áâà11
7700000000002230030
18/1áâà13,18/1áâà13,18/1áâà14
7700000000002230031
18/1áâà15,18/1áâà16,18/1áâà17
7700000000002230032
18/1áâà20,18/1áâà22,18/1áâà23
7700000000002230033
18/1áâà25,18/1áâà26,18/1áâà27
7700000000002230034
18/1áâà28,18/1áâà29,18/1áâà30
7700000000002230035
18/1áâà31,18/1áâà32,18/1áâà37,22
7700000000002230036
22áâà2,22áâà3,25,26áâà1,26áâà2,26áâà3
7700000000002230037
26áâà4,26áâà5,26áâà6,26áâà8,26áâà9
7700000000002230038
26áâà10,26áâà12,26áâà15,26áâà16
7700000000002230039
26áâà19,26áâà20,26,27áâà1,27áâà2,29
7700000000002230040
31áâà1,31áâà2,31áâà3,31ª1,31ª2,31ª3
7700000000002230041
31ª3áâà2,31ª4,31ª5,33áâà1,33áâà2
7700000000002230042
33áâà3,33áâà4,33áâà5,33áâà7,33áâà8
7700000000002230043
33áâà10,33áâà11,33áâà12,33áâà13
7700000000002230044
33áâà14,33áâà15,33áâà16,33áâà18
7700000000002230046
33áâà19,33áâà20,33áâà21,33áâà22
7700000000002230047
33áâà23,33áâà24,33áâà25,33áâà26
7700000000002230048
33áâà27,33áâà28,33áâà29,33áâà30
7700000000002230049
33áâà31,33áâà34,33áâà35,33áâà64
7700000000002230050
33ª21áâà7,33ª22áâà12,35áâà1,35áâà2
7700000000002230051
4áâà1,4áâà2,4áâà3,4áâà4,4áâà6,6áâà1
7700000000002240001
6áâà2,6áâà3,6áâà4,6áâà5,6áâà6,6áâà7
7700000000002240002
6áâà8,6áâà9,6áâà10,6áâà11,6áâà12
7700000000002240003
6áâà15,6áâà16,6áâà17,6áâà24,8áâà1
7700000000002240004
7700000000002240005
8áâà8,8áâà9,8áâà10,8áâà11,8áâà12
7700000000002240006
8áâà13,8áâà15,8áâà16,8áâà18,8áâà1
7700000000002240007
8áâà2,8áâà3,8áâà4,8áâà5,8áâà6
7700000000002240008
8áâà7,8áâà8,8áâà10,8áâà11,8áâà12
7700000000002240009
8áâà13,8áâà16,8áâà17,10ª2,10ª2áâà1
7700000000002240010
7700000000002240011
11áâà6,12,13,13áâà1,13áâà2,13áâà3
7700000000002240012
13áâà4,13áâà6,13áâà7,13áâà8
7700000000002240013
13áâà9,14áâà1,14áâà1,14áâà2,14áâà3
7700000000002240014
14áâà4,14áâà5,14áâà6,14áâà2
7700000000002240015
14áâà4,14áâà5,14áâà6,14áâà7
7700000000002240016
14áâà8,14áâà11,14áâà16,14áâà17
7700000000002240017
15áâà1,15áâà2,15áâà3,21áâà1,21áâà2
7700000000002240018
8/21,9/19,10,10ª1,10,11,11áâà2,12
7700000000002250001
12,13,15/15,18ª2áâà3,21,22,22áâà2,23
7700000000002250003
23,24,24,24áâà9,24áâà10,25,26,27
7700000000002250004
5ª1áâà4
7700000000002250002
1_3ª1,3ª1,3ª2,3áâà1,3,4,4,4áâà2,5
7700000000002250005
5áâà4,6,6,6áâà2
7700000000002250006
1,1áâà5,2,2,3,3áâà3,4áâà15,4áâà16
7700000000002260001
4áâà19,4áâà20,4ª1,4ª1,4ª2,4ª2,4ª3
7700000000002260002
4ª4,4ª4,4ª5,4ª6,4ª7,4ª8,4ª9,4ª10,4ª11
7700000000002260003
4ª12,4ª13,4ª16,4ª17,4ª18,4ª19,4ª20
7700000000002260004
4ª21,4ª22,4ª23,4ª24,4ª25,4ª26,4ª27
7700000000002260005
6/14,7ª1,7ª2,9,9/18,11áâà1,11áâà2
7700000000002260006
11áâà4,11áâà5,11áâà6,11áâà7,11áâà8
7700000000002260007
11áâà9,11áâà10,12,12áâà1,13áâà1,13áâà2
7700000000002260008
13áâà3,13áâà5,13áâà10,13áâà14,13áâà20
7700000000002260009
13áâà21,13áâà23,13áâà24,13áâà28
7700000000002260010
13áâà32,13áâà33,13áâà36,13áâà39
7700000000002260011
13áâà41,13áâà42,13áâà44,13áâà45
7700000000002260012
13áâà46,13áâà50,13áâà51,13áâà53
7700000000002260013
13áâà54,13áâà57,13áâà58,13áâà62
7700000000002260014
13áâà63,13áâà65,13áâà66,13áâà69
7700000000002260015
13áâà75,13áâà77,13áâà78,13áâà80
7700000000002260016
13áâà81,13áâà82,13áâà84,13áâà85
7700000000002260017
13áâà86,13áâà88,13áâà89,13áâà95,13,14
7700000000002260018
14áâà1,14áâà3,15áâà1,16,17,18,18áâà1
7700000000002260019
18áâà2,20,22,22ª1,22ª2áâà1,22,24
7700000000002260020
24áâà1,26,28,28áâà1,30ª1,30ª2,32
7700000000002260021
32/9áâà1,34,36/18,38áâà1,38áâà2,38áâà3
7700000000002260022
38áâà5,38áâà6,38áâà7,40
7700000000002260023
2áâà1,2áâà2,2áâà3,2áâà7,2,2áâà1
7700000000002270001
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000002270002
2áâà6,2áâà7,2,2,4áâà1,4áâà2,4áâà3
7700000000002270003
4áâà4,4áâà5,4áâà6,4áâà7,4áâà8,4áâà9
7700000000002270004
4áâà10,4áâà11,4áâà13,4áâà14,4áâà15
7700000000002270005
4áâà22,4áâà23,4áâà31,7,9áâà1,9ª2
7700000000002270006
13/25áâà1,13/25áâà2,13/25áâà3
7700000000002270007
13/25áâà11,15/18ª1,15/18ª2,17,17
7700000000002270008
3,3,3,5,5ª1,5ª1áâà1
7700000000002270009
39,39áâà1,39ª1,39ª1áâà1,47,47áâà2,49
7700000000002280001
51,51áâà1,51áâà2,53,55áâà1,57,59áâà1
7700000000002280003
59áâà2,60,62,66,66ª2,68áâà1,68áâà2
7700000000002280004
68áâà3,68áâà5,70ª1,70ª2,70ª2áâà2,72,74
7700000000002280005
76,76áâà3,78,78,80áâà1,80áâà2,80áâà3
7700000000002280006
80áâà4,82áâà1,82áâà2,82áâà3,82áâà5
7700000000002280007
82áâà9,84áâà2,86,88,90áâà1,90áâà2
7700000000002280008
90áâà3,90áâà4,90áâà5,90áâà6,90áâà7
7700000000002280009
90áâà8,90áâà9,90áâà10,90áâà11,90áâà12
7700000000002280010
90áâà13,90áâà14,90áâà15,90áâà16
7700000000002280011
90áâà17,90áâà18,90áâà19,90áâà20
7700000000002280012
90áâà21,90áâà22,90áâà23,90áâà24
7700000000002280013
90áâà25,90áâà26,90áâà28,90áâà29
7700000000002280014
90áâà30,90áâà31,90áâà32,90áâà36
7700000000002280015
90áâà37,90áâà40,90áâà41,90áâà44
7700000000002280016
90áâà48,90áâà55,90áâà57,90áâà58
7700000000002280017
90áâà59,90áâà60,90áâà61,90áâà62
7700000000002280018
90áâà63,90áâà64,90áâà65,90áâà66
7700000000002280019
90áâà67,90áâà68,90áâà69,90áâà72
7700000000002280020
90áâà101,92,92áâà2,92áâà3,96áâà1,98
7700000000002280021
98,98,100áâà1,100áâà8,100áâà9
7700000000002280022
100áâà10,100áâà11,100áâà1,100áâà2
7700000000002280023
100áâà3,100áâà4,100áâà5,100áâà8
7700000000002280024
100áâà1,100áâà2,100áâà3,100áâà4
7700000000002280025
104áâà2,108áâà1,108áâà2,108áâà3
7700000000002280026
108áâà4,108áâà5,108áâà6,108áâà7
7700000000002280027
108áâà8,108áâà9,108áâà10,108áâà11
7700000000002280028
110áâà1,110áâà2,110áâà4,110áâà5
7700000000002280029
110áâà6,110áâà8,110áâà9,110áâà1
7700000000002280030
110áâà2,110áâà3,110áâà4,110áâà5
7700000000002280031
110áâà6,110áâà7,110áâà8,110áâà9
7700000000002280032
110áâà10,110áâà11,110áâà12,110áâà13
7700000000002280033
1áâà5,1áâà6,1áâà50,1áâà10,1áâà1
7700000000002280035
25,26/10,27,27áâà2,28,29ª1,29ª2
7700000000002280036
29ª2áâà3,30,30áâà2,31,31ª2,31ª2áâà2,32
7700000000002280037
32áâà2,33,34áâà1,36áâà1,37,37áâà1
7700000000002280038
37áâà2,38,38áâà2,40ª1,40ª2,41,41áâà2
7700000000002280039
42,42áâà2,43,43áâà2,44,46ª1,46ª2,48,50
7700000000002280040
50áâà2,50ª1,50,50áâà1,52áâà1,54áâà1
7700000000002280041
54ª1,54ª1áâà2,54ª2,56,58ª1,58ª2,58ª3
7700000000002280042
58ª3áâà2,58ª4
7700000000002280043
7700000000002280002
1áâà13
7700000000002280044
1áâà1,1áâà10,1áâà11,1ª1,1ª2,1/2áâà2
7700000000002280045
1/2áâà4,1áâà1,1áâà2,1áâà3,1áâà4
7700000000002280046
1áâà3,1áâà4,1áâà1,1áâà2,1áâà3
7700000000002280047
1áâà14,1áâà15,1áâà16,1áâà17
7700000000002280048
1áâà18,1áâà19,1áâà20,1áâà1,1áâà2
7700000000002280050
1áâà3,1áâà6,2ª1,2ª2,2,2,2áâà1
7700000000002280051
2áâà1,2áâà2,2áâà4,2áâà5,2áâà6
7700000000002280052
2áâà7,2áâà8,2áâà12,2áâà13,3,4ª1
7700000000002280053
4ª1áâà2,4ª2,4ª3,4ª3áâà1,4ª3áâà2,4ª4
7700000000002280054
4áâà1,4áâà2,4,5,6,6áâà2,7,8,8áâà2,9
7700000000002280055
9áâà1,10,10áâà1,11,11áâà10,12,12ª2
7700000000002280056
12ª2áâà1,12,13,14,14ª3,15,15áâà3,17
7700000000002280057
18,19ª1,19ª1áâà2,19ª2,19ª3,20,20áâà2
7700000000002280058
1,2áâà1,2áâà2,2áâà3,2áâà4,3,3áâà1
7700000000002390001
111033
4áâà37,4áâà38,4áâà39,4áâà47,4áâà52
7700000000002390003
4ª11,4ª12,4ª12áâà2,4,6,6áâà2,6áâà4
7700000000002390004
3áâà1,3áâà2,4áâà21,4áâà23,4áâà25
7700000000002390002
3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,3áâà9
7700000000002400001
111020
3áâà10,3áâà12,3áâà13,3áâà15,3áâà16
7700000000002400002
3áâà17,3áâà18,3áâà19,3áâà20,3áâà21
7700000000002400003
3áâà22,4,6,7áâà2,7áâà3,7áâà4,7áâà6
7700000000002400004
7áâà7,7áâà8,7áâà9,7áâà10,7áâà12,7áâà13
7700000000002400005
7áâà14,7áâà15,7áâà17,7áâà18,7áâà19
7700000000002400006
7áâà22,7áâà23,7áâà24,7áâà28,7áâà30
7700000000002400007
7áâà31,7áâà32,7áâà42,8,10ª1,10ª2,12
7700000000002400008
12áâà2,14,16,18áâà1,20,20áâà2
7700000000002400009
1,1áâà1,1,3,3áâà2,5,7,9,11,11ª1,13,15
7700000000002410001
7700000000002410002
8áâà1,8áâà2,8áâà3,8áâà4,8áâà6,8áâà12
7700000000002410003
8áâà26,8áâà39,8áâà5,8áâà7,10,10ª1
7700000000002410004
10ª2,12,12ª2,14,14áâà9,14áâà10,19
7700000000002410005
7700000000002410006
19áâà6,19áâà9,20/17,21,21áâà3
7700000000002410007
21áâà1,22/12,22/12áâà3,23,24,25
7700000000002410008
25áâà2,26,26áâà2,27,28/4,28/4áâà2,28/6
7700000000002410009
29,29áâà1,30,30,30ª1,30,31,32
7700000000002410010
32áâà1,32,33,34,34áâà1,34ªáâà1
7700000000002410011
34ªáâà2,34ª1,34ª1áâà2,34ª2,35,36
7700000000002410012
36áâà4,36/7áâà3,36áâà1,37,37,37áâà1
7700000000002410013
39,39áâà2,40,40áâà1,41,41áâà1,41áâà2
7700000000002410014
41áâà4,41,42,44áâà1,44áâà2,44áâà3
7700000000002410015
44áâà4,44áâà5,44áâà6,44áâà7,44áâà8
7700000000002410016
44áâà9,44áâà10,44áâà11,44áâà12,45,47
7700000000002410017
48áâà1,48áâà2,48áâà3,48áâà6,49/1
7700000000002410018
49/1áâà2,49/1áâà3,49/1áâà4,49/1áâà6
7700000000002410019
50áâà1,50áâà2,50áâà3,50áâà7,51,51áâà2
7700000000002410020
51áâà4,51,51áâà1,51ª2,51,53ª1,53ª2
7700000000002410021
53ª3,53ª4,53ª5,53ª6,53ª7,53ª7,53ª8
7700000000002410022
53ª9,53ª12,53ª13,53ª15,53ª16,53ª18
7700000000002410023
53ª19,53ª22,53ª23,53ª24,53ª25,53ª26
7700000000002410024
53ª28,53ª29,53ª30,53ª31,53ª32,55áâà1
7700000000002410025
55áâà2,55áâà3,55áâà4,55áâà5,55áâà6
7700000000002410026
55áâà7,55áâà8,55áâà9,55áâà10,55áâà11
7700000000002410027
55áâà12,55áâà13,55ª1,55ª2,55ª3,55ª3
7700000000002410028
55ª4,55ª5,55ª7,55ª8,55ª9,55ª10,55ª11
7700000000002410029
55ª12,55ª14,55ª15,55ª17,55ª26,55ª27
7700000000002410030
55ª28,55ª31,57áâà1,57áâà2,57áâà3
7700000000002410031
57áâà5,57áâà7,57áâà8,57áâà9,57áâà10
7700000000002410032
57áâà11,57áâà12,57áâà13,57áâà14
7700000000002410033
57áâà15,57áâà16,57áâà17,57áâà20
7700000000002410034
57áâà21,57áâà22,57áâà23,57áâà25
7700000000002410035
57áâà26,57áâà36,57áâà37,57áâà54
7700000000002410036
57áâà55,57áâà76,57áâà80,57áâà81
7700000000002410037
57áâà82,59,63áâà1,63áâà2,63áâà3,63áâà7
7700000000002410038
63áâà8,63áâà9,63áâà10,63áâà12,63áâà13
7700000000002410039
63áâà14,63áâà15,65áâà1,65áâà2,65áâà3
7700000000002410040
65áâà17,65áâà18,65áâà19,65áâà20
7700000000002410041
65áâà22,65áâà23,65áâà24,65/7áâà25,67/8
7700000000002410042
67/8áâà1,67/8áâà2,67/8áâà3,67/8áâà5
7700000000002410043
67/8áâà6,67/8áâà7,67/8áâà8,67/8áâà9
7700000000002410044
67/8áâà10,69,73áâà2,73áâà3,73áâà5
7700000000002410045
73áâà6,73áâà7,73áâà10,73áâà11
7700000000002410046
73áâà13,73áâà15,73áâà16,73áâà17
7700000000002410047
73áâà19,73áâà23,73áâà24,73áâà33
7700000000002410048
75áâà1,75áâà2,75áâà5,75áâà13,75áâà14,75
7700000000002410049
2ª11,2ª18,2ª21,2ª30,4áâà1,4áâà2,4áâà3
7700000000002410050
111116
2,2áâà11,2áâà11,2ª3,2ª5,2ª10,2ª11
7700000000002410051
4áâà7,4ª1,4ª2,4ª3,4ª4,4,6,6áâà1,6áâà2
7700000000002410052
4/6
7700000000002430001
7700000000002440001
2áâà8,2áâà9,2áâà10,2áâà11,2áâà13
7700000000002440002
2áâà15,2áâà18,2áâà19,2áâà20,2áâà21
7700000000002440003
2áâà24,2áâà25,2áâà26,2áâà30,2áâà33
7700000000002440004
2áâà36,2áâà37,2áâà39,2áâà40,2áâà46
7700000000002440005
2áâà48,2áâà50,2áâà51,2áâà52,2áâà66
7700000000002440006
2áâà67,2áâà72,2áâà98,2áâà99,4,6,6áâà2
7700000000002440007
6áâà3,10,15,15áâà1,15áâà2
7700000000002440008
1áâà1,1áâà3,1áâà4,1áâà6,1áâà30,2,2áâà3
7700000000002450001
2áâà4,2áâà1,2áâà2,2áâà9,2áâà10,3
7700000000002450002
1/2áâà1,2áâà1,2áâà1,2áâà1,2áâà2
7700000000002460001
2áâà7,2áâà8,2ª2,2áâà1
7700000000002460002
7700000000002470001
1áâà7,1áâà8,1áâà9,1áâà10,1áâà11,1áâà1
7700000000002470002
1áâà2,2,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000002470003
2áâà6,2áâà7,2áâà8,2áâà9,2áâà10,2áâà1
7700000000002470004
2áâà1,2áâà3,2áâà6,2áâà1,2áâà2
7700000000002470005
3áâà5,3áâà6,3áâà7,6áâà1,6áâà2
7700000000002470006
7700000000002470007
10áâà5,10áâà6,11áâà1,11áâà2,11áâà4
7700000000002470008
11áâà6,11áâà10,11áâà11,11áâà12,11áâà17
7700000000002470009
11áâà18,11áâà27,11áâà28,12áâà5,12áâà6
7700000000002470010
12áâà7,12áâà8,13áâà1,13áâà3,13áâà6
7700000000002470011
13áâà7,13áâà1,13áâà2,13áâà3,13áâà4
7700000000002470012
13áâà6,13áâà1,13áâà2,13áâà3
7700000000002470013
13áâà5,13áâà6,15áâà1,15áâà2,15áâà3
7700000000002470014
15áâà5,15áâà6,15áâà7,15áâà8,15áâà9
7700000000002470015
15áâà1,15áâà2,15áâà3,15áâà4
7700000000002470016
15áâà5,15áâà6,16,16áâà1,16,18áâà1
7700000000002470017
18áâà2,18áâà1,18áâà2,18áâà3
7700000000002470018
18áâà4,18áâà5,18áâà6,18áâà7,20áâà1
7700000000002470019
2áâà3,2áâà4,3áâà1,3áâà2,3áâà3,3áâà4
7700000000002470020
20áâà1,22áâà1,22áâà2,22áâà3,22áâà5
7700000000002470021
7700000000002480001
1,2,4
7700000000002490001
7700000000002500001
1/47áâà1,12,12áâà2,32,34/3áâà1
7700000000002510001
34/3áâà2,34/3áâà4,36áâà1,36áâà2,38
7700000000002510002
38áâà2,42,42/5,42/5áâà3,42/5ª1,42/5ª2
7700000000002510003
42/5ª4,42áâà1,42áâà3,42áâà4,42áâà6
7700000000002510004
42áâà7,42áâà8,42ª1,44áâà1,44áâà2
7700000000002510005
44áâà3,44áâà5,44áâà8,44áâà11,44áâà23,46
7700000000002510006
9_11áâà1,9_11áâà2,10,10áâà4,15,15áâà2
7700000000002520001
22áâà1,22áâà3,24,27áâà1,27áâà2,27áâà5
7700000000002520002
29áâà1,31,31áâà2,31áâà3
7700000000002520003
28áâà1,28áâà2,28áâà3,28áâà4,28áâà5
7700000000002520004
28áâà6,28áâà8,28áâà9,28áâà10,28áâà11
7700000000002520005
28áâà14,28áâà15,28áâà17,30,30áâà2
7700000000002520006
32áâà1,32áâà2,32áâà3,47/11áâà1,51ª1,51ª2
7700000000002520007
4áâà1,4áâà2,4áâà3
7700000000002530001
3áâà2,3áâà3,3áâà6,3áâà7,3áâà8,3áâà10
7700000000002530002
3áâà11,3áâà19,3áâà25,3áâà26
7700000000002530004
1áâà37,3áâà5,3áâà9,3áâà12,3áâà13
7700000000002530003
1áâà1,1áâà2,1áâà3,1áâà4,1áâà6,1áâà7
7700000000002530005
1áâà8,1áâà9,1áâà10,1áâà11,1áâà12
7700000000002530006
1áâà13,1áâà15,1áâà16,1áâà17,1áâà18
7700000000002530007
1áâà21,1áâà22,1áâà23,1áâà24,1áâà26
7700000000002530008
3áâà14,3áâà15,3áâà16,3áâà18,3áâà66
7700000000002530009
3áâà66,3áâà66,3áâà1,5
7700000000002530010
7700000000002540001
1áâà7,1áâà8,1áâà9,1áâà10,1áâà11,1áâà12
7700000000002540002
1áâà13,1áâà14,1áâà15,1áâà16,1áâà17
7700000000002540003
1áâà18,1áâà19,1áâà20,1áâà21,1áâà22
7700000000002540005
1áâà23,1áâà24,1áâà25,1áâà26,1áâà27
7700000000002540006
1áâà28,1áâà29,1áâà30,1áâà32,1áâà33
7700000000002540007
1áâà34,1áâà35,1áâà36,1áâà37,1áâà38
7700000000002540008
1áâà39,1áâà41,2áâà1,3áâà1,3áâà2,3áâà3
7700000000002540009
3áâà4,3áâà5,3áâà6,3áâà7,3áâà8,3áâà10
7700000000002540010
3áâà11,3áâà13,3áâà14,3áâà15,3áâà19
7700000000002540011
3áâà20,3áâà21,3áâà23,3áâà24,3áâà25
7700000000002540012
3áâà26,3áâà27,3áâà28,3áâà29,3áâà30
7700000000002540013
3áâà31,3áâà32,3áâà33,3áâà50,4áâà1
7700000000002540014
4áâà2,4áâà3,4áâà16,4áâà17,4áâà18
7700000000002540015
4áâà28,5áâà1,5áâà2,5áâà4,5áâà5,5áâà6
7700000000002540016
5áâà8,5áâà10,5áâà12,5áâà16,5áâà17
7700000000002540017
5áâà21,5áâà25,5áâà47,5áâà49,5áâà50
7700000000002540018
5áâà52,6áâà3
7700000000002540019
4áâà1,4áâà2,6áâà1,6áâà2,6áâà4,6áâà5
7700000000002540020
6áâà6,6áâà7,6áâà10,6,6áâà1,6áâà2
7700000000002540021
6áâà3,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000002540022
7áâà6,7áâà7,7áâà8,7áâà9,7áâà10,7áâà11
7700000000002540023
7áâà12,7áâà13,7áâà14,7áâà15,7áâà16
7700000000002540004
7áâà17,7áâà18,7áâà19,7áâà20,7áâà21
7700000000002540024
7áâà22,7áâà23,7,7áâà1,7áâà2,7áâà3
7700000000002540025
7áâà4,7áâà5,7áâà6,7áâà7,7áâà8
7700000000002540026
7áâà9,9áâà1,9áâà2,9áâà3,9áâà4,9áâà5
7700000000002540027
9áâà6,9áâà7,9áâà8,9áâà11,9áâà12,9áâà14
7700000000002540028
9áâà15,9áâà16,9áâà29,9áâà30,10áâà1
7700000000002540029
10áâà2,10áâà3,10áâà4,10áâà6,10áâà8
7700000000002540030
10áâà9,10áâà11,10áâà22,10áâà23,11
7700000000002540031
7700000000002540032
7700000000002540033
11áâà11,11áâà12,11áâà13,11áâà14
7700000000002540034
11áâà16,11áâà17,11áâà18,12áâà1,12áâà2
7700000000002540035
12áâà3,12áâà4,12áâà6,12áâà7,12áâà8
7700000000002540036
12áâà10,12áâà11,12áâà15,13áâà1,13áâà2
7700000000002540037
13áâà3,13áâà4,13áâà5,13áâà6,13áâà8
7700000000002540038
13áâà9,13áâà10,13áâà11,13áâà12,15
7700000000002540039
7700000000002540040
16áâà6,16,18áâà1,18áâà2,22áâà1,22áâà2
7700000000002540041
22áâà4,22áâà5,22áâà6,22áâà7,22áâà8
7700000000002540042
22áâà12,22áâà13,22áâà15,22áâà16
7700000000002540043
22áâà18,22áâà19,22áâà20,22áâà21,24áâà1
7700000000002540044
24áâà2,24áâà3,24áâà4,24áâà5,24áâà6
7700000000002540045
24áâà7,24áâà8,24áâà9,24áâà10,24áâà11
7700000000002540046
24áâà12,26áâà1,26áâà2,26áâà6,26áâà7,28
7700000000002540047
7700000000002550001
28áâà23,28áâà25,28áâà32,28áâà33
7700000000002570001
1/116áâà1,1/116áâà2,1/116áâà4
7700000000002570002
1/116áâà5,3,4,5,5,5,7,8,8áâà1,9áâà1
7700000000002570003
9áâà2,9áâà3,9áâà4,9áâà5,9áâà6,9áâà8
7700000000002570004
9áâà9,9áâà10,11áâà1,11áâà2,11áâà3
7700000000002570005
7700000000002570006
11áâà9,11áâà10,11áâà11,11áâà12,11áâà13
7700000000002570007
7700000000002570008
12áâà6,12áâà7,12áâà8,13áâà1,13áâà2
7700000000002570009
13áâà3,13áâà4,13áâà5,13áâà6,13áâà7
7700000000002570010
14áâà1,15áâà1,15áâà2,15áâà3,15áâà6
7700000000002570011
7700000000002570012
17áâà8,17áâà13,17áâà14,17áâà15,17áâà16
7700000000002570013
19áâà1,21ª2áâà1,21ª2áâà2,21ª2áâà3
7700000000002570014
7700000000002570015
23áâà6,23áâà7,24áâà1,24áâà4,24áâà6
7700000000002570016
7700000000002570017
25áâà7,25áâà8,25áâà9,25áâà12,27
7700000000002570018
36áâà1,47,47áâà1,47áâà3,47áâà9,47áâà23
7700000000002570019
87,89áâà1,89áâà2,89áâà3,89áâà4,89áâà5
7700000000002570020
89áâà6,89áâà7,89áâà8,89áâà9,89áâà10
7700000000002570021
89áâà11,89áâà12,89áâà13,89áâà14
7700000000002570022
89áâà15,89áâà16,89áâà17,89áâà18
7700000000002570023
89áâà19,89áâà20,89áâà21,89áâà22
7700000000002570024
89áâà23,89áâà24,89áâà25,89áâà26
7700000000002570025
89áâà27,89áâà28,89áâà29,89áâà30
7700000000002570026
89áâà31,89áâà32,89áâà33,89áâà34
7700000000002570027
89áâà35,89áâà38,89áâà39,89áâà40
7700000000002570028
89áâà41,89áâà43,89áâà44,89áâà45
7700000000002570029
89áâà46,89áâà47,91áâà1,91áâà2,91áâà3
7700000000002570030
91áâà4,91áâà5,91áâà6,91áâà7,91áâà8
7700000000002570031
91áâà9,91áâà10,91áâà11,91áâà12,91áâà13
7700000000002570032
91áâà18,101,101áâà2,101áâà3
7700000000002570033
91áâà14,91áâà15,91áâà16,91áâà17
7700000000002570034
26áâà5,26áâà6,28áâà3,28áâà4
7700000000002570036
28áâà5,28áâà6,28áâà8,28áâà9
7700000000002570037
28áâà10,28áâà12,28áâà13,28áâà14
7700000000002570038
28áâà15,28áâà17,28áâà19,28áâà20
7700000000002570039
28áâà21,28áâà24,28áâà27,28áâà28
7700000000002570040
28áâà31,28áâà43,28áâà49
7700000000002570041
11,12/1,12/1áâà2,12/1áâà3,12/1áâà4
7700000000002590001
12/1áâà5,12/1áâà6,12/1áâà8,12/1áâà9
7700000000002590002
12/1áâà11,12/1áâà12,12/1áâà13
7700000000002590003
8,11,13,13áâà2,13áâà3,13áâà1,13áâà2
7700000000002600001
13áâà3,13áâà5,15,15áâà1,15áâà5,16ª1
7700000000002600002
16ª2,16,17áâà1,19,19áâà2,19áâà3,20
7700000000002600003
22ª1,22ª2,22ª3
7700000000002600004
6áâà2
7700000000002610001
7700000000002610002
3áâà10,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000002610003
4áâà6,4áâà7,4áâà8,4áâà9,4áâà10,4áâà11
7700000000002610004
4áâà12,4áâà13,4áâà21,4áâà1,4áâà2
7700000000002610005
7700000000002610006
4áâà9,4áâà12,5,5_7áâà1,6áâà3,6áâà4
7700000000002610007
6áâà5,6áâà6,6áâà7,6áâà8,7áâà2,7áâà3
7700000000002610008
7700000000002610009
8áâà7,8áâà8,8áâà9,8áâà10,8áâà11,8áâà12
7700000000002610010
8áâà13,8áâà14,8áâà15,8áâà16,8áâà40
7700000000002610011
8áâà41,8áâà42,8áâà45,9,9áâà2,9áâà3
7700000000002610012
9áâà4,9áâà5,9áâà6,9áâà7,9áâà8,9áâà9
7700000000002610013
9áâà10,9áâà11,9áâà12,17,17áâà1,17áâà3
7700000000002610014
23áâà1,23áâà2,23áâà3,23áâà4
7700000000002610015
7700000000002610017
10áâà6,10áâà7,10áâà8,10áâà9,10áâà10
7700000000002610018
10áâà11,10áâà12,10áâà13,10áâà14
7700000000002610019
10áâà15,10áâà16,10áâà17,10áâà18
7700000000002610020
10áâà19,10áâà20,10áâà21,10áâà22
7700000000002610021
10áâà23,10áâà24,10áâà25,10áâà26
7700000000002610022
10áâà32,10áâà33,10áâà34,21áâà1,21áâà2
7700000000002610023
3áâà1,3áâà15,7áâà8,10,10áâà1,12
7700000000002620001
12áâà1,12áâà3,14,14áâà2,16,20,22
7700000000002620002
22áâà1,24áâà1,24áâà1,24áâà2
7700000000002620003
24áâà2,24áâà3,24áâà3,24áâà4
7700000000002620004
24áâà5,24áâà6,24áâà7,24áâà8
7700000000002620005
24áâà9,24áâà10,24áâà11,24áâà12
7700000000002620006
24áâà13,24áâà15,26áâà1,26áâà2,26áâà3
7700000000002620007
7700000000002620008
26áâà9,26áâà10,26áâà11,26áâà12,26áâà13
7700000000002620009
26áâà14,26áâà15,26áâà16,26áâà17
7700000000002620010
26áâà18,31,32áâà1,32áâà2,32áâà4
7700000000002620011
32áâà5,32áâà7,32áâà8,32áâà9
7700000000002620012
32áâà10,32áâà12,32áâà13,32áâà14
7700000000002620013
32áâà15
7700000000002620014
7700000000002630001
áâà1,30áâà
7700000000002630002
11/15,11/15áâà1,11/15áâà2,46áâà3
7700000000002640001
1,1/2ª,2,2ª1,3áâà1,3áâà2,3áâà3,3áâà5
7700000000002640002
3áâà7,3áâà10,3áâà11,3áâà15,3ª8,3ª10
7700000000002640003
3ª10,3/4áâà12,3áâà1,3áâà2,3áâà3
7700000000002640004
3áâà4,3áâà5,3áâà6,3áâà7,3áâà9,4
7700000000002640005
5áâà1,5áâà3,5ª1,5ª2,6,6áâà2,6áâà3
7700000000002640006
7áâà1,7áâà2,7áâà3,7áâà4,7áâà5,8,9áâà2
7700000000002640007
9áâà6,9áâà7,9áâà8,9áâà9,9áâà10,9áâà11
7700000000002640008
9áâà12,9áâà19,9áâà26,9/1áâà9,10,10áâà2
7700000000002640009
12,12áâà,12áâà1,12áâà1,13,14áâà4
7700000000002640010
14ª1,14ª2,14ª3,14,15,15ª1,16,17
7700000000002640011
17áâà2,17áâà3,18,18áâà2,19,20ª1
7700000000002640012
20ª1áâà2,20ª2,20ª2áâà4,20ª3,21,36áâà1
7700000000002640013
36áâà2,36áâà3,36áâà6,36,38,38áâà2
7700000000002640014
38áâà1,38áâà2,40,40áâà1,40áâà2
7700000000002640015
40áâà3,40áâà4,40áâà5,40áâà6,40áâà7
7700000000002640016
40áâà8,40áâà9,40ª1,40ª1áâà1,40ª1áâà2
7700000000002640017
40ª2,40ª9,40,40,40áâà1,40áâà3
7700000000002640018
40áâà4,40áâà5,40áâà6,40áâà7
7700000000002640019
40áâà8,40áâà9,42áâà1,44
7700000000002640020
1áâà1,1áâà2,1áâà3,1áâà4,2áâà1,2áâà2
7700000000002660001
2áâà3,2áâà4,2áâà5,2áâà6,2áâà7,2áâà8
7700000000002660002
2áâà9,2áâà10,2áâà11,2áâà12,2áâà13
7700000000002660003
2áâà14,2áâà15,2áâà16,2,3áâà1,3áâà2
7700000000002660004
7700000000002660005
3áâà9,3áâà11,3áâà12,3áâà13,3áâà14
7700000000002660006
3áâà15,3áâà16,3áâà17,3áâà18,3áâà19
7700000000002660007
3áâà20,3áâà21,3áâà22,3áâà23,3áâà24
7700000000002660008
3áâà25,3áâà26,3áâà27,3áâà28,4,4áâà30
7700000000002660009
5,6,7,9,9,9áâà2,9áâà3,9áâà4
7700000000002660010
9áâà5,9áâà6,9áâà7,20áâà1,20áâà3
7700000000002660011
20áâà4,20áâà6,20áâà7,20áâà9,20áâà16
7700000000002660012
20áâà17,20áâà18,20áâà19,20áâà20
7700000000002660013
20áâà22,20áâà23,20áâà24,20áâà25
7700000000002660014
20áâà26,20áâà28,20áâà31,20áâà33
7700000000002660015
89áâà1
7700000000002680001
1áâà1,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000002680002
4áâà6,5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000002680003
5áâà6,5áâà7,5áâà8,5áâà9,5áâà10,6áâà1
7700000000002680004
7700000000002680005
8ª1,8ª2,8ª2áâà2,8ª3,8,8,8áâà2
7700000000002680006
8áâà3,9áâà1,9áâà3,9áâà5,9áâà7,9áâà8
7700000000002680007
9áâà9,9áâà10,9áâà11,10,10ª1,10ª2,10ª3
7700000000002680008
10áâà1,12ª1,13áâà1,14ª1,14ª2,14,15
7700000000002680009
15áâà2,15áâà3,16ª1,16ª2,16ª3,16ª3áâà3
7700000000002680010
16ª3áâà4,16ª3áâà2,16ª4,17,17áâà2,18ª1
7700000000002680011
18ª1áâà2,18ª1áâà3,18ª2,18ª3,19,20,21
7700000000002680012
23,23áâà1,25,25áâà1,25áâà2,25áâà3
7700000000002680013
25áâà4,25áâà5
7700000000002680014
2,4áâà1,6,10,14
7700000000002690001
111250
3áâà1,3áâà2
7700000000002700001
105094
7701
45286555000
3áâà16,3áâà57,3áâà65,3ª21,3ª70
7700000000002700002
105229
1_3áâà1,1_3áâà1,1_3áâà2,1_3áâà3
7700000000002700003
1_3áâà4,1_3áâà4,1_3áâà5,1_3áâà6
7700000000002700005
1_3áâà7,1_3áâà8,1_3áâà9,1_3áâà10
7700000000002700006
1_3áâà20,1_3áâà21,1_3áâà22,1_3áâà23
7700000000002700007
1_3áâà23,1_3áâà26,1_3áâà30,1_3áâà31
7700000000002700008
1_3áâà34,1_3áâà46,1_3áâà49,1_3áâà58
7700000000002700009
1_3áâà59,1_3áâà62,1_3áâà63,1_3áâà67
7700000000002700010
1_3áâà11,1_3áâà13,1_3áâà14,1_3áâà17
7700000000002700004
1_3áâà68,1_3áâà69,1_3áâà71,1_3áâà158
7700000000002700011
áâà1,áâà2,áâà3,áâà4,2áâà1,2áâà5,2áâà6
7700000000002700012
2áâà16,2áâà17,2ª2,2ª3,2ª4,2ª10,2ª11
7700000000002700013
2ª12,2ª14,2ª15,2ª27,2ª28,2ª29,2ª37
7700000000002700014
2ª38,2ª39,2_5áâà1,2áâà1,16,16áâà2
7700000000002700015
3,3áâà1,3áâà2,3áâà6,3áâà6,3áâà16,3ª1
7700000000002710001
3ª2,3ª3,3ª4,3ª4,3ª5,3ª6,3ª7,3,5áâà1
7700000000002710002
5áâà1,5áâà2,5áâà3,5áâà3,5áâà4,5áâà5
7700000000002710003
5áâà7,5áâà7,5áâà8,5áâà12,5áâà19
7700000000002710004
5áâà19,5áâà20,5áâà36,5ª10,5ª10,5ª11
7700000000002710005
5ª13,5ª15,5ª16,5ª17,5ª18
7700000000002710006
1áâà1
7700000000002710007
2,4,4áâà2,8/1,8/1áâà2,10/12,14/1,16/2
7700000000002710008
18/1,22/2
7700000000002710009
78/14áâà1,78/14áâà2,78/14áâà4
7700000000002720001
78/14áâà5,78/14áâà6,78/14áâà7
7700000000002720002
78/14áâà8,78/14áâà10,78/14áâà11
7700000000002720003
78/14áâà12,78/14áâà13,78/14áâà14
7700000000002720004
78/14áâà15,78/14áâà16,78/14áâà17
7700000000002720005
78/14áâà30,78/14áâà31,78/14áâà32
7700000000002720006
4áâà1,4áâà2
7700000000002720007
1áâà2,1áâà3,1áâà4,1áâà5,1áâà6,1áâà11
7700000000002740001
3áâà1,3áâà3,3áâà4,3áâà5,3áâà6,3áâà7
7700000000002740002
3áâà8,3áâà9,3áâà11,3áâà12,3áâà13
7700000000002740003
3áâà15,3áâà16,3áâà21,3áâà22,3áâà24,3
7700000000002740004
4,5áâà1,6,7,7áâà1,7áâà2,7áâà3,7áâà4
7700000000002740005
7áâà5,7áâà6,7áâà7,7áâà8,8,9,10,12/19
7700000000002740006
14,14áâà2,16,18ª1,18ª2,20,20áâà2
7700000000002740007
1áâà1,1áâà2,1áâà3,36áâà1,36áâà2
7700000000002750001
38áâà6,38áâà7,38áâà8,38/15áâà1
7700000000002760001
105120
38áâà1,38áâà2,38áâà3,38áâà4,38áâà5
7700000000002760002
38/15áâà2,38/15áâà4,38/15áâà8
7700000000002760003
38/15áâà9,38/15áâà10,38/15áâà12
7700000000002760004
38/15áâà13,38/15áâà13,38/15áâà15
7700000000002760005
38/15áâà16,38/15áâà21,40,42,42áâà1
7700000000002760006
42áâà2,42áâà3,42áâà4
7700000000002760007
4áâà2,4áâà2,4áâà3,4áâà1,4áâà2
7700000000002760009
4áâà3,4áâà4,4áâà5,4áâà6,4áâà1
7700000000002760010
4áâà2,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000002760011
6áâà6,6áâà6,6áâà7,6áâà9,6áâà11,6áâà12
7700000000002760012
6áâà13,6áâà18,6áâà19,6áâà20,6áâà22
7700000000002760013
6áâà25,6áâà29,11áâà1,11áâà2,11áâà3
7700000000002760014
7700000000002760015
11áâà9,11áâà10,11áâà16,11áâà17,11áâà18
7700000000002760016
11áâà24,11áâà26,11áâà27,11áâà28
7700000000002760017
11áâà29,11áâà30,11áâà31,11áâà32
7700000000002760018
11áâà33,11áâà34,11áâà35,11áâà36
7700000000002760019
11áâà37,11áâà38,11áâà39,11áâà40
7700000000002760020
11áâà41,11áâà42,11áâà43,11áâà44
7700000000002760021
11áâà45,11áâà46,11áâà47,11áâà48
7700000000002760022
11áâà49,11áâà50,11áâà51,11áâà53
7700000000002760023
11áâà54,11áâà55,11áâà56,11áâà57
7700000000002760024
11áâà58,12áâà1,12áâà6,12áâà8,22,32áâà1
7700000000002760025
32áâà2,32áâà4,32áâà5,32áâà6,32áâà7
7700000000002760026
32áâà8,32áâà9,32áâà10,32áâà11,32áâà12
7700000000002760027
32áâà13,32áâà15,32áâà17,32áâà18
7700000000002760028
32áâà20,32áâà28,32áâà29,32áâà38,34áâà1
7700000000002760029
34áâà2,34áâà6
7700000000002760030
2,5áâà3,5áâà4,5áâà5,12áâà1,12áâà1
7700000000002770001
12áâà2,12áâà3,12áâà8
7700000000002770002
9,9/11,9,13,15/32áâà21,17,17áâà2
7700000000002780001
6,8/16,18,25
7700000000002860001
23,23áâà2,23áâà3,23áâà8
7700000000002870001
7700000000002870002
2áâà7,2áâà8,2ª1,2ª1áâà1,2ª2
7700000000002870003
17,19,19áâà2
7700000000002870004
7700000000002870005
1áâà8,1áâà9,1áâà12,1áâà13,3,3áâà1
7700000000002870006
3áâà4,3áâà5,3áâà6,3áâà8,3áâà9,3áâà11
7700000000002870007
3áâà12,3áâà21,3ª1,3/5ª1,3/5ª1,3,4/1
7700000000002870008
4/1áâà1,4/1áâà9,4/1áâà10,4/1áâà11
7700000000002870009
4/1áâà21,4/1áâà22,4/1áâà23,4/1áâà24,6
7700000000002870010
6,7_9áâà2,8áâà2,8áâà3,8áâà4,8áâà5,8ª1
7700000000002870011
9,9áâà1,9áâà2,9áâà3,9áâà4,9áâà5,9áâà1
7700000000002870012
9áâà2,9áâà3,9áâà4,9áâà5,9áâà6
7700000000002870013
9áâà7,9áâà8,9áâà9,9áâà10,9áâà11
7700000000002870014
9áâà12,9áâà13,9áâà14,9áâà15,10
7700000000002870015
10áâà3,10,11,11áâà1,12,12áâà1,12áâà2
7700000000002870016
12áâà3,12áâà5,12áâà6,12áâà7,12áâà8
7700000000002870017
12áâà9,12áâà10,12áâà11,12áâà12,12áâà13
7700000000002870018
12áâà14,12áâà15,12áâà15,12áâà16
7700000000002870019
12áâà17,12áâà18,12áâà21,12áâà23
7700000000002870020
12áâà24,12áâà25,12áâà26,12áâà27
7700000000002870021
12áâà28,12áâà38,12áâà41,12áâà42
7700000000002870022
12áâà43,12áâà44,12áâà45,12áâà76,12ª1
7700000000002870023
12ª2,12ª3,12ª4,12/13áâà5,12/13áâà7
7700000000002870024
12áâà1,12áâà2,12áâà3,12áâà4
7700000000002870025
12áâà6,12áâà7,12áâà8,12áâà10
7700000000002870026
12áâà11,12áâà13,12áâà14,12áâà15
7700000000002870027
12áâà16,12áâà18,13áâà1,13áâà2,13áâà3
7700000000002870028
13áâà4,13áâà5,13áâà6,13áâà84,14áâà1
7700000000002870029
14áâà1,14áâà1,14áâà2,14áâà3,14áâà4
7700000000002870030
14áâà6,14áâà7,14áâà9,14áâà10,14áâà11
7700000000002870031
14áâà13,14áâà14,14áâà15,14áâà34
7700000000002870032
14áâà35,14áâà36,14áâà37,14áâà1
7700000000002870033
14áâà2,14áâà3,14áâà4,14áâà5
7700000000002870034
14áâà6,14áâà7,14áâà8,14áâà9
7700000000002870035
14áâà10,14áâà11,14áâà12,14áâà13
7700000000002870036
14áâà15,14áâà16,14áâà17,14áâà18
7700000000002870037
14áâà20,14áâà21,14áâà22,14áâà23
7700000000002870038
14áâà24,14áâà25,14áâà26,14áâà27
7700000000002870039
14áâà28,14áâà29,14áâà31,14áâà32
7700000000002870040
14áâà39,14áâà40,14áâà42,14áâà43
7700000000002870041
14áâà44,14áâà45,15áâà1,15áâà1
7700000000002870042
15áâà2,15áâà2,15áâà4,15áâà5,15áâà6
7700000000002870043
15áâà7,15áâà8,15áâà9,15áâà11,15áâà12
7700000000002870044
15áâà13,15áâà14,15áâà15,15áâà18,16,16
7700000000002870045
17áâà1,17áâà1,17áâà1,17áâà1
7700000000002870046
17áâà1,17áâà2,17áâà3,17áâà4,17áâà5
7700000000002870047
17áâà6,17áâà7,17áâà8,17áâà9,17áâà22
7700000000002870048
17áâà23,17áâà24,17,17áâà8,17áâà1
7700000000002870049
17áâà1,17áâà2,17áâà3,17áâà4
7700000000002870050
17áâà5,17áâà7,17áâà10,21,23áâà1
7700000000002870051
1/4,1/5,1/5ª2
7700000000002880001
3/5ª1,3/5ª5,3/5ª9,3/5ª10,3/5ª10áâà1
7700000000002880002
3/5ª11,3/5ª14,3/5ª15,5/7,7,7áâà1,7áâà2
7700000000002880003
7áâà3,7áâà4,7áâà5,7áâà6,7áâà7,7áâà9
7700000000002880004
7áâà10,7áâà11,7áâà13,7áâà16,7
7700000000002880005
7700000000002890001
11/17,23,23áâà2
7700000000002900001
7700000000002910001
16áâà6,16áâà7,16áâà8,24áâà2,24áâà3
7700000000002910002
24áâà4,24áâà8
7700000000002910003
7700000000002920001
14ª19,21
7700000000002930001
7700000000002940001
5áâà1,5áâà7,5ª1,5ª2,5ª3,5ª4
7700000000002950001
5áâà1,7,7áâà3,7áâà1,7áâà2,7áâà3
7700000000002950002
7áâà4,7áâà5,7áâà6,7áâà8,7áâà10
7700000000002950003
7áâà10,7áâà11,9áâà1,15/3áâà1
7700000000002950004
15/3áâà2,15/3áâà3
7700000000002950005
9,9áâà1,9áâà2,9ª1,9ª1áâà2,11,11áâà2
7700000000002950006
11ª2,14,16,16,18,24,24,24,26
7700000000002950007
26áâà32,26áâà36,26áâà37,26/3
7700000000002950008
26/3áâà3,26/3áâà48
7700000000002950009
1áâà1,1áâà2,1áâà3,1áâà4,3,4ª1,4ª2,6
7700000000002960001
6áâà2,7/25,8ª1,10,10
7700000000002960002
5/7,5/7áâà3
7700000000002970001
7700000000002990001
1áâà1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà25
7700000000003010001
3,3áâà1,4áâà1,4áâà5,4áâà6,4áâà7,5,5áâà2
7700000000003010002
7áâà1,8,9,10,12áâà1,12,12áâà1
7700000000003030001
1,1áâà1,1áâà3,2,3,3áâà2,4,5,6,6,6,7
7700000000003030002
12áâà2,12áâà3,12áâà4,12áâà5
7700000000003030003
12áâà6,12áâà7,12áâà8,12áâà9
7700000000003030004
12áâà10,12áâà11,14áâà1,14áâà3,14áâà4
7700000000003030005
14áâà4,14áâà5,14áâà7,14áâà7,14áâà7
7700000000003030006
14áâà8,14áâà9,14áâà10,14áâà10,14áâà11
7700000000003030007
14áâà12,14áâà13,14áâà14,14áâà14
7700000000003030008
14áâà15,14áâà17,14áâà18,14áâà22
7700000000003030009
14áâà23,14áâà24,14áâà25,14áâà26
7700000000003030010
14áâà27,14áâà28,14áâà29,14áâà30
7700000000003030011
14áâà31,14áâà32,14áâà33,14áâà34
7700000000003030012
14áâà35,14áâà36,14áâà37,14áâà38
7700000000003030013
14áâà42,14áâà42,14áâà44,14áâà45
7700000000003030014
14áâà46,14áâà49,14áâà50,15,15áâà2
7700000000003030015
1,1áâà2,3,5
7700000000003040001
3áâà1,3áâà2,3áâà4,3áâà5,3áâà6,3áâà9
7700000000003050001
7700000000003050002
3áâà17,3áâà18,3áâà20,3áâà21,3áâà23
7700000000003050003
3áâà24,3áâà25,3áâà26,3áâà27,3áâà30
7700000000003050004
3áâà31,3áâà32,3áâà33,3áâà34,3áâà35
7700000000003050005
3áâà36,3áâà37,3áâà38,3áâà41,3áâà90
7700000000003050006
3áâà91,3áâà94,3áâà95,3áâà97,3áâà100
7700000000003050007
3áâà101,3áâà106,3áâà107,7,9,9áâà2
7700000000003050008
7700000000003050009
35áâà6,35áâà7,35áâà8,35áâà9,35áâà10
7700000000003050010
35áâà11,35áâà12,35áâà13,35áâà14
7700000000003050011
35áâà15,35áâà16,35áâà17,35áâà18
7700000000003050012
35áâà19,35áâà20,35áâà21,35áâà22
7700000000003050013
35áâà23,35áâà24
7700000000003050014
7700000000003050015
2áâà7,2áâà8,2áâà9,2áâà1,2áâà2,2áâà3
7700000000003050016
2áâà4,4áâà1,6áâà1,6,54áâà4,54áâà7
7700000000003050017
54áâà8,54áâà9,54áâà10,54áâà11,54áâà14
7700000000003050018
54áâà18,54áâà19
7700000000003050019
22,22áâà1,22áâà2,22áâà3,22áâà4,24
7700000000003080001
4,4áâà2,4áâà3,6/2,8/1,10ª1,10ª2,12/2
7700000000003080002
14/1,14/1áâà2,16,16áâà2,16ª2,18/10
7700000000003080003
18/10áâà2
7700000000003080004
31,31áâà1,31áâà2,33ª1áâà1
7700000000003080005
1áâà2,1ª1,1ª2,1ª2áâà3,3ª1,3ª2,3ª2áâà1
7700000000003080006
3ª2áâà2,3ª2áâà3,3ª3,3ª4,3áâà1,5ª1,5ª2
7700000000003080007
7ª2,9,9áâà1,9áâà2,11,11áâà2,19áâà1
7700000000003080008
19áâà2,19áâà3,19áâà4,19áâà5,21áâà1
7700000000003080009
21áâà2,21áâà3,21áâà4,21áâà5,21áâà1
7700000000003080010
3,3,3áâà1,4,4áâà1,5,5ª2,5ª3,5ª3áâà1
7700000000003090001
5ª3áâà2,6ª1,6ª2,7ª1,7ª2,7ª3,7ª3áâà2
7700000000003090002
7ª3áâà3,7ª3áâà4,7,8,9ª1,9ª2
7700000000003090003
3,3áâà1,4,5,5áâà2,5áâà3,6,6ª1,6ª2,8
7700000000003100001
8ª2,8ª2áâà9,8ª2áâà10
7700000000003100002
2,3ª1,3ª1,14áâà1
7700000000003110001
1,1/2,1,4áâà3,4áâà4,4áâà6,4áâà7,4áâà8
7700000000003120001
4áâà9,4áâà10,4áâà11,4áâà12,4áâà13
7700000000003120002
4áâà14,4áâà15,4áâà16,6áâà1,6áâà2,7,9
7700000000003120003
9ª1,9áâà1,9áâà3,9áâà4,9áâà7,9áâà8
7700000000003120004
9áâà9,9áâà10,11,11áâà2,11ª1,13,15,16
7700000000003120005
17,18,19,19áâà2,19áâà3,19áâà4,22,24,26
7700000000003120006
8,26áâà1,26áâà2
7700000000003130001
2,4,8,8áâà1,17
7700000000003130002
3,3áâà1,13áâà1,15,17,17áâà1
7700000000003140001
2áâà1,2áâà2,4áâà1,4áâà2,4áâà4,4áâà6,6
7700000000003140002
6,8ª1,8ª2,8ª2áâà2,10ª1,10ª2,12ª1,12,14
7700000000003140003
4áâà1,4áâà2,4áâà3,4áâà4,4áâà5,4áâà6
7700000000003150001
4áâà7,4áâà8,8/16,18,18,18áâà2,20
7700000000003150002
20áâà2,22ª1,22/8,23áâà1,23áâà2,24,24
7700000000003150003
24áâà2,24,24ª2,25,26áâà1,27,29,30ª1
7700000000003150004
30ª2,30ª3,30,31,38,38áâà2,38,40
7700000000003150005
1áâà1,1áâà2,2áâà1,2áâà1,2áâà2,2áâà10
7700000000003160001
2áâà11,2áâà12,2áâà13,2áâà14,2áâà14
7700000000003160002
2áâà15,2áâà16,2áâà17,2áâà19,2áâà19
7700000000003160003
7700000000003160004
2áâà3,2áâà4,2áâà5,2áâà6,2áâà8,2áâà9
7700000000003160005
2áâà25,2áâà30,2áâà38,2áâà43,2áâà55
7700000000003160006
2ª27áâà1,2ª29áâà2,2/26
7700000000003160007
7700000000003170001
43áâà1,43áâà2,43áâà3,43áâà4,43áâà5
7700000000003170002
43áâà7,43áâà8,43áâà9,43áâà10
7700000000003170003
1áâà1,1áâà2,1áâà3,1áâà12,1áâà21,1áâà24
7700000000003180001
1áâà25,1áâà26,1áâà27,1áâà28,1áâà29,1
7700000000003180002
2áâà1,2ª1,2áâà1,3/8,3/8ª,3/8áâà1
7700000000003180003
3/8áâà1,3/8áâà2,3/8áâà3,3/8áâà11
7700000000003180004
3/8áâà15,3/8áâà16,3/8áâà17,3/8áâà18
7700000000003180005
3/8áâà23,3/8áâà32,3/8áâà35,3/8áâà36
7700000000003180006
3/8áâà37,3/8áâà38,3/8áâà39,3/8áâà40
7700000000003180007
4áâà1,4áâà2,4áâà3,4áâà4,4áâà6,4áâà7
7700000000003180008
4áâà8,4áâà9,4áâà10,4áâà11,4áâà12
7700000000003180009
4áâà13,4áâà14,4áâà15,4áâà17,4áâà18
7700000000003180010
4áâà19,4áâà20,4áâà23,4áâà24,4áâà25
7700000000003180011
4áâà26,4áâà27,4áâà28,4áâà29,4áâà30
7700000000003180012
4áâà32,4áâà34,4áâà35,4áâà36,4áâà37
7700000000003180013
4áâà38,4áâà39,4áâà40,4áâà41,4áâà42
7700000000003180014
4áâà43,4áâà44,4áâà45,4áâà46,4áâà53
7700000000003180015
4áâà1,4áâà2,4áâà5,4áâà10,4áâà1
7700000000003180016
4áâà2,4áâà3,4áâà4,6áâà4,6ª1,6ª2,6,8
7700000000003180017
2,4,6áâà1,6áâà1,6áâà3,6áâà4,6áâà5
7700000000003190001
6áâà6,6áâà7,6áâà8,6áâà9,6áâà10,6áâà11
7700000000003190003
6áâà18,6áâà19,6áâà20,6
7700000000003190004
6áâà12,6áâà13,6áâà14,6áâà15,6áâà16
7700000000003190002
1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà6,2áâà9
7700000000003200001
2áâà10,2áâà11,2áâà13,2áâà14,2áâà15
7700000000003200002
2áâà16,2áâà17,2áâà19,2áâà29,3,3áâà2
7700000000003200003
3ª1,4áâà1,4áâà2,4áâà3,4áâà4,4,4áâà3
7700000000003200004
4,4áâà2,4áâà3,5,5áâà3,5áâà4,5áâà5
7700000000003200005
5,6,6/14áâà8,6,9,10áâà1,10áâà2
7700000000003200006
10áâà3,10áâà4,10áâà5,10áâà6,10áâà7
7700000000003200007
10áâà8,10áâà9,10áâà12,10áâà13,10áâà14
7700000000003200008
10áâà15,10áâà16,10áâà18,10áâà19
7700000000003200009
10áâà20,10áâà21,10áâà22,10áâà23
7700000000003200010
10áâà24,10áâà28,11,20áâà1,25áâà1
7700000000003200011
25áâà2,25áâà3,25áâà4,25áâà5,25áâà6
7700000000003200012
25áâà7,25áâà8,25áâà9,25áâà10,25áâà11
7700000000003200013
25áâà12,25áâà13,25áâà14,25áâà15
7700000000003200014
25áâà16,25áâà17,25áâà18,25áâà19
7700000000003200015
25áâà20,25áâà21,25áâà22,25áâà1
7700000000003200016
25áâà2,25áâà3,31áâà1,31áâà2,31áâà3
7700000000003200017
31áâà4,31áâà5,31áâà6,31áâà7
7700000000003200018
1/9,3áâà1,3áâà3,3áâà5,3áâà1,4,5áâà1
7700000000003220001
5áâà2,5áâà3,5áâà4,5áâà5,6áâà1
7700000000003220002
6áâà2,6áâà3,6áâà4,6áâà5,6áâà7,6áâà8
7700000000003220003
6áâà9,6áâà10,6áâà11,6áâà12,6áâà13,8ª1
7700000000003220004
8ª2,10,10áâà2,10áâà3,12,12áâà2
7700000000003220005
7700000000003230001
3,4,4,5,5áâà3,5áâà4,6,6áâà2,6áâà3,8
7700000000003240001
8áâà2,9,10,11,12,12áâà5,13,14,15,16ª1
7700000000003240002
16ª2,17,18,18áâà2,18áâà3,18,19,20,21
7700000000003240003
5_9,6
7700000000003250001
1/7,2áâà1,2áâà2,15,17,31,33,33áâà1,35
7700000000003260001
39/47,39/47áâà2,39/47áâà3,41,43
7700000000003260002
4,5ª1,5ª1áâà2,5ª1áâà3,5ª2,7/14,8,10ª1
7700000000003270001
10ª2,10/12,14,16,21/13áâà1,21/13áâà2
7700000000003270002
1,3áâà1,3áâà2,3áâà3
7700000000003280001
2,2,2áâà1,2áâà2,2áâà3,2áâà4
7700000000003290001
2áâà5,3,4,5,6,7,8ª1,8ª2,8ª2áâà1
7700000000003290002
8ª2áâà2,8ª2áâà3,8ª2áâà4,8ª2áâà5
7700000000003290003
8ª2áâà6,8ª3,9,9áâà4,9_11,9_11áâà11
7700000000003290004
9_11áâà12,10ª1,10ª2,11,12ª1,12ª2,13
7700000000003290005
14ª1,14ª2,14ª3,14ª3áâà2,14ª4,14ª4áâà2
7700000000003290006
14ª5áâà1,14ª6,16ª1,16ª1áâà2,16ª2,16ª3
7700000000003290007
18,20,22,22áâà10
7700000000003290008
34,34áâà2,34áâà14,34áâà1,34áâà2
7700000000003300001
105118
7720
45263583000
34ª1,36,36áâà1,36áâà2,36áâà3,36áâà4
7700000000003300002
36áâà5,36áâà7,36áâà9,36áâà11,36áâà12
7700000000003300005
38,38áâà9,38áâà19,38áâà25,38áâà27
7700000000003300006
38áâà64,38áâà65,38áâà71,38áâà72
7700000000003300007
38áâà103,38áâà103,38áâà104,38áâà105
7700000000003300009
38ª4,38ª6,38ª6,38ª8,38ª12,38ª15,38ª17
7700000000003300010
38ª21,38ª23,38ª25,38ª28,38ª32,38ª83
7700000000003300011
38ª92,38ª97,38ª102,38ª107,38ª108
7700000000003300012
38ª121,38ª125,40,40áâà1,40áâà2,40áâà3
7700000000003300013
40áâà3,40áâà4,40áâà5,40áâà7,40áâà8
7700000000003300015
40áâà9,40áâà10,40áâà12,40áâà14
7700000000003300016
40áâà16,40áâà18,40áâà22,40áâà23
7700000000003300017
40áâà24,40áâà25,40áâà27,40áâà28
7700000000003300018
40áâà31,40áâà32,40áâà33,40áâà34
7700000000003300019
40áâà35,40áâà36,40áâà38,40áâà39
7700000000003300020
40áâà42,40áâà44,40áâà45,40áâà55
7700000000003300021
40áâà65,40áâà68,40áâà69,40áâà71
7700000000003300022
40áâà72,40áâà73,40áâà75,40áâà76
7700000000003300023
40áâà81,40áâà85,40áâà88,40áâà89
7700000000003300024
40áâà90,40áâà96,40áâà97,40áâà101
7700000000003300025
40áâà102,40áâà112,40áâà122,40áâà128
7700000000003300026
40áâà129,40áâà132,40áâà143,40ª7,40ª10
7700000000003300027
25,25áâà2,25áâà4,25áâà5,25áâà6,27,27
7700000000003300028
45263588000
27áâà1
7700000000003300029
29,29áâà6,29áâà7,29áâà8,29áâà9,29áâà10
7700000000003300030
105275
29áâà11,29áâà12,29áâà13,29ª2,29ª3
7700000000003300031
47,47áâà1,51,53,55,59,63áâà1,63áâà2
7700000000003300032
105568
45263567000
63áâà3,63
7700000000003300033
4áâà2
7700000000003300003
109544
4áâà1
7700000000003300004
40,40áâà1,40áâà2,40áâà3,40áâà4
7700000000003300034
40áâà5,40áâà6,40áâà7,42,42áâà1
7700000000003300035
42áâà3,42áâà17,42áâà20,42,42áâà1
7700000000003300036
28,28áâà1,30,30áâà1,32áâà1,32áâà6
7700000000003300037
32áâà7,32áâà7,32áâà7,32áâà8,32áâà10
7700000000003300038
32áâà11,32áâà12,32áâà15,32áâà16
7700000000003300039
32áâà17,32áâà20,32áâà21,32áâà22
7700000000003300040
32áâà24,32áâà26,32áâà27,32áâà28
7700000000003300041
32áâà29,32áâà30,32áâà33,32áâà34
7700000000003300042
32áâà36,32áâà39,32áâà51,32áâà53
7700000000003300043
32áâà54,32áâà64,32áâà83,32áâà85
7700000000003300044
17,17áâà2,17áâà3,17áâà4,17áâà5,17áâà26
7700000000003300045
17ª2,17,17,19,19,21,21áâà1,21áâà2
7700000000003300046
32áâà86,32áâà87,32áâà88,32áâà89
7700000000003300047
32áâà90,32áâà93,32áâà1,32áâà2,32áâà3
7700000000003300048
21áâà3,21áâà5,23,23áâà1,23áâà7,23áâà8
7700000000003300049
23áâà15,23áâà17,23áâà18,23áâà19
7700000000003300050
23áâà20,23áâà22,23áâà26,23áâà28
7700000000003300051
42áâà2,42áâà3,42áâà4
7700000000003300052
23áâà30,23áâà31,23áâà34,23áâà37
7700000000003300053
23áâà38,23áâà43,23áâà44,23áâà50
7700000000003300054
23áâà51,23áâà63,23áâà93,23áâà94
7700000000003300055
23áâà95,23ª2,23ª2,23ª3,23ª4,23ª5,23ª6
7700000000003300056
23ª13,23ª14,23ª16,23ª21,23ª24,23ª25
7700000000003300057
4áâà20,4áâà21,4áâà22,4áâà23,4áâà24
7700000000003300058
2áâà1,2áâà2,2áâà9,2áâà37,2áâà38,2áâà39
7700000000003300059
2áâà40,2áâà41,2áâà42,2áâà44,2áâà45
7700000000003300060
2áâà46,2áâà47,2áâà48,2áâà49,2áâà50
7700000000003300061
2áâà51,2áâà52,2áâà55,4áâà1,4áâà2,4áâà3
7700000000003300062
4áâà4,4áâà5,4áâà6,4áâà7,4áâà7,4áâà8
7700000000003300063
7700000000003300064
4áâà14,4áâà15,4áâà16,4áâà17,4áâà19
7700000000003300065
4áâà25,4áâà26,4áâà27,4áâà28,4áâà29
7700000000003300066
4áâà30,4áâà31,4áâà32,4áâà33,4áâà34
7700000000003300067
4áâà35,4áâà36,5áâà1,5áâà2,5áâà3,5áâà4
7700000000003300068
6,6áâà5,6,7,7áâà1,7,9,9áâà2,10/2
7700000000003300069
23ª27,23ª28,23ª29,23ª32,23ª42,23ª46
7700000000003300070
31áâà50,31áâà57,31,31áâà2,31áâà4
7700000000003300071
111123
31áâà5,31áâà6,31áâà7,31áâà9
7700000000003300072
10/2áâà2,11,11ª1,11ª2,11ª3
7700000000003300073
23ª64,23ª90,23ª90,23,23áâà1
7700000000003300074
88
7700000000003300075
33áâà1
7700000000003300014
45263570000
31,31áâà2,31áâà2,31áâà7,31áâà7
7700000000003300008
33,33áâà2,33áâà3,33áâà4,33áâà5,33áâà6
7700000000003300076
33áâà7,33áâà8,33áâà9,33áâà10,33áâà11
7700000000003300077
33,33,33,35,35áâà1,35áâà2,35áâà3
7700000000003300078
44,44áâà1,46,46áâà2,46áâà3,46áâà5
7700000000003300079
46áâà7,46áâà8,46áâà9,46áâà11,46áâà12
7700000000003300080
46/2áâà6,46/2áâà10,48/1,50,50,50áâà6
7700000000003300081
50,52,52áâà1,54,54áâà3,56,56áâà2
7700000000003300082
56áâà3,56áâà4,56áâà5,56áâà6,56áâà7
7700000000003300083
56áâà8,56áâà8,56áâà9,56áâà10,56áâà10
7700000000003300084
56áâà11,56áâà12,56áâà13,56áâà14
7700000000003300085
56áâà15,56áâà16,56áâà17,56áâà18
7700000000003300086
56áâà19,56áâà20,56áâà21,56áâà22
7700000000003300087
56áâà23,56áâà24,56áâà25,56áâà26
7700000000003300088
56áâà27,56áâà28,56áâà29,56áâà30
7700000000003300089
56áâà31,56áâà32,56áâà33,56áâà34
7700000000003300090
56áâà35,56áâà37,56áâà38,56áâà39
7700000000003300091
56áâà40,56áâà42,56áâà43,56áâà44
7700000000003300092
56áâà45,56áâà46,56áâà47,56áâà48
7700000000003300093
56áâà49,56áâà51,56áâà52,56áâà55
7700000000003300094
56áâà56,56áâà57,56áâà58,56áâà59
7700000000003300095
56áâà60,56áâà61,56áâà62,56áâà63
7700000000003300096
56áâà64,56áâà65,56áâà66,56áâà69
7700000000003300097
56áâà70,56áâà71,56áâà1,58,58áâà1,60ª1
7700000000003300098
60ª1áâà1,60ª2,60ª3,62,62áâà2,62áâà3
7700000000003300099
62áâà4,64,64/2áâà1,66/1,68,70,70áâà2
7700000000003300100
72,72áâà3,72,72áâà1,74áâà2,74/2
7700000000003300101
76áâà2,76áâà3,76áâà6,76/1,76,76áâà2
7700000000003300102
78áâà3,78áâà4,78ª1,78ª2,80ª1,80ª2
7700000000003300103
82/2ª1,82/2ª2,84/1áâà1,84/1áâà3
7700000000003300104
84/1áâà4,84/1áâà5,84/1áâà6,84/1áâà7
7700000000003300105
84/1áâà10,84/1áâà12,84/1ª2áâà9
7700000000003300106
84/1ª3áâà9,84/1ª4áâà2,86,86áâà2,86áâà3
7700000000003300107
86áâà4,86áâà6,86áâà7,86áâà8,86áâà12
7700000000003300108
86ª2,86ª3,86ª4,86ª6,86ª7,86ª12,88
7700000000003300109
88áâà1,88áâà2,88áâà3,88áâà4,88áâà6
7700000000003300110
88áâà8,88áâà10,88áâà11,88áâà16,88áâà24
7700000000003300111
88ª7,88ª8,88ª9,88ª10,88ª11,88ª11
7700000000003300112
88ª12,88ª14,88ª15,88ª16,88ª17,88ª18
7700000000003300113
31,31áâà1,31áâà3,31áâà10,31áâà11
7700000000003300114
31áâà12,31áâà13,31áâà14,31áâà15
7700000000003300115
31áâà16,31áâà17,31áâà18,31áâà19
7700000000003300116
31áâà21,31áâà23,31áâà24,31áâà25
7700000000003300117
31áâà26,31áâà27,31áâà28,31áâà29
7700000000003300118
31áâà32,31áâà33,31áâà34,31áâà35
7700000000003300119
31áâà36,31áâà37,31áâà38,31áâà39
7700000000003300120
31áâà40,31áâà41,31áâà42,31áâà43
7700000000003300121
31áâà44,31áâà45,31áâà48,31áâà49
7700000000003300122
31áâà10,31áâà12,31áâà13,31áâà14
7700000000003300123
31áâà15,31áâà16,31áâà17,31
7700000000003300124
92,92,92,94ª1,94ª2,94ª3,94ª3áâà2
7700000000003300128
111531
94ª4,94ª4áâà1,94,94,96ª1,96ª2,96ª3
7700000000003300129
96ª4,96ª4áâà2,96ª4áâà3,96,96,96
7700000000003300130
98ª1,98ª2,98ª3,98ª4,98ª4áâà1,98ª5
7700000000003300131
98ª5áâà2,98ª6,98ª7,98ª7áâà3,98ª8,98
7700000000003300132
98,98áâà1,98,98áâà1,100ª1
7700000000003300133
100ª1áâà1,100ª2,100ª3,100ª4,100ª5
7700000000003300134
100ª5áâà2,100ª5áâà3,100ª6,100ª7,100,102
7700000000003300135
2,2áâà2,4,4áâà2,9,11áâà1
7700000000003310001
1,1,2ª1,2ª2,2ª3,3áâà1,3áâà2,3,4áâà1
7700000000003320001
125599
7743
45277577000
4ª1,4ª1áâà3,4ª1áâà4,4ª2,6áâà1,6áâà2,7
7700000000003320002
7áâà1,7áâà2,8ª1,8ª1áâà5,8ª2,8ª3,8ª4
7700000000003320003
8ª4áâà1,10áâà1,10ª1,10ª2,10áâà1
7700000000003320004
10áâà2,12,14áâà1,14ª1,14ª1áâà3,14ª2
7700000000003320005
14ª3,14ª3áâà3,14ª4,14,15,15áâà1
7700000000003320006
15áâà2,16/2ª1,16/2ª2
7700000000003320007
1ª1,1ª2,1ª3,1ª3áâà1,1ª4,1ª4áâà1,2
7700000000003330001
127486
2áâà2,2ª2,3,3áâà1,3áâà2,3ª2,3ª3,3ª4,4
7700000000003330002
4áâà2,5,5áâà1,5áâà2,5áâà3,5,5áâà2
7700000000003330003
5áâà3,5áâà4,5áâà7,6,8,8,8áâà1,10
7700000000003330004
11áâà1,11áâà2,11áâà3,11áâà4,12,13
7700000000003330005
13áâà2,13áâà3,13ª1,13ª2,13ª2áâà1,13
7700000000003330006
14,15,15áâà1,15áâà4,16,17,17,18
7700000000003330007
18áâà1,18áâà2,18áâà3,18áâà4
7700000000003330008
18áâà5,18áâà6,19ª1,19ª1áâà1,19ª1áâà2
7700000000003330009
20ª1,20ª2,20ª2áâà1,20,22,22ª1,24ª1
7700000000003340001
125412
7713
45277574000
24ª2,24ª2áâà1,24,26/2,28,28áâà2
7700000000003340003
28áâà3,28áâà4,28áâà5,28áâà6,30,30áâà1
7700000000003340004
30,30áâà2,30áâà3,34,34áâà3,36ª1
7700000000003340005
36ª1áâà1,36ª1áâà3,36,36áâà1,46áâà1
7700000000003340006
46áâà2,46áâà3,46áâà4,46áâà1,46áâà2
7700000000003340007
17,19,21ª1,21ª1áâà1,21ª3,21,23ª1
7700000000003340009
23ª2,23ª3,23ª3áâà1,25/30,27,29,29ª1
7700000000003340010
29ª1áâà1,29ª1áâà2,29ª2,29ª2áâà1
7700000000003340011
29ª2áâà2,29ª2áâà3,29ª2áâà4,29ª2áâà5
7700000000003340012
29ª2áâà6,29,29,29áâà2,31,31,33,33
7700000000003340013
7700000000003340014
7700000000003340015
7700000000003340016
35áâà16,35áâà17,35áâà18,35áâà19
7700000000003340017
35áâà20,35áâà21,35áâà22,35áâà23
7700000000003340018
35áâà24,35áâà25,35áâà26,35áâà27
7700000000003340019
35áâà28,35áâà30,35áâà31,35,35áâà2
7700000000003340020
35áâà3,35áâà4,35áâà5,35áâà6
7700000000003340021
35áâà7,35áâà8,35áâà9,35áâà10
7700000000003340022
35áâà1,37,37áâà1,37áâà2,37áâà3
7700000000003340023
37áâà4,37áâà7,37áâà8,37áâà9
7700000000003340024
37áâà1,37áâà2,41,41áâà1,41áâà2
7700000000003340025
43áâà2,43áâà3,43áâà4,43ª1
7700000000003340026
2/38,2,2áâà1,2áâà2,4ª1,4ª2,4ª3,4ª4
7700000000003340027
45277559000
4ª4áâà1,4ª4áâà2,6,6áâà2,6ª1,6ª1áâà2
7700000000003340028
6ª1áâà3,6ª2,6ª3,8ª1,8ª2,8ª3,8ª4
7700000000003340029
8ª4áâà1,10,10áâà2,10áâà3,14áâà3
7700000000003340030
14ª1,14ª1áâà2,14,16,16áâà1,16
7700000000003340031
16áâà1,16áâà2
7700000000003340032
1ª1,1ª2,1,1áâà2,1áâà3,1,1,3áâà2
7700000000003340033
3ª1,3ª2,3ª2áâà1,3ª2áâà2,3ª1,5áâà2,5ª1
7700000000003340034
5ª2,7ª1,7ª1áâà1,7ª1áâà3,7ª1áâà4
7700000000003340035
7ª1áâà5,7ª3,9áâà2,9ª1,9ª2,9ª2áâà1
7700000000003340036
11áâà3,11ª1,11ª2,11ª2áâà1,11ª2áâà2
7700000000003340037
11ª2áâà3,11ª3,13ª1,13ª2,13ª2áâà1,15ª1
7700000000003340038
15ª2,15ª2áâà1,15ª2áâà2,15ª2áâà3,17,17ª2
7700000000003340039
124,124,126,128,130,132,132áâà1
7700000000003350001
127204
7715
45280585000
132áâà2,132áâà3,132áâà4,134,136
7700000000003350002
136áâà2,138,140,142,144,146,148,150
7700000000003350003
152,152,152áâà1,152áâà2,152áâà3
7700000000003350004
152áâà4,154áâà1,154,156,156ª8,158
7700000000003350005
161,161áâà1,161áâà2
7700000000003350006
45280563000
163áâà5,163áâà6,163áâà8,163áâà9
7700000000003350007
163áâà10,163áâà11,163áâà12,163áâà13
7700000000003350009
163áâà14,163áâà15,163áâà16,163áâà17
7700000000003350010
163áâà18,163áâà19,163áâà20,163áâà2
7700000000003350011
163áâà3,163áâà4,163áâà5,163ª1,163
7700000000003350012
163,163áâà1,163áâà2,163áâà1
7700000000003350013
163áâà2,163áâà3,163áâà4,163áâà5
7700000000003350014
163áâà6,163áâà7,163áâà9,164,165
7700000000003350015
165,165áâà1,165ª1,165ª1áâà1
7700000000003350016
165ª1áâà2,165ª2,165ª2áâà1,165ª3
7700000000003350017
165ª4,165ª4áâà1,165ª5,165ª6
7700000000003350018
165ª6áâà1,165ª6áâà2,165ª1
7700000000003350019
165ª1áâà1,165ª2,165ª3,165ª5,165ª6
7700000000003350020
165ª6áâà1,165ª6áâà2,165ª7
7700000000003350021
165ª7áâà1,165ª8,165ª9,165ª9áâà1
7700000000003350022
165ª10,165ª10áâà1,165ª11,165ª12
7700000000003350023
165ª12áâà1,165ª12áâà2,165ª13
7700000000003350024
165ª14,165ª14áâà1,166,167áâà1
7700000000003350025
167áâà2,167áâà3,167áâà4,167áâà5
7700000000003350026
167áâà6,167áâà7,167áâà8,167áâà9
7700000000003350027
167áâà10,167áâà11,167áâà12,167áâà13
7700000000003350028
167áâà14,167áâà15,167áâà16,167áâà18
7700000000003350029
167áâà19,167áâà20,167áâà21,167áâà22
7700000000003350030
167áâà23,167áâà24,167áâà25,167áâà27
7700000000003350031
167áâà28,167áâà29,167áâà30,167áâà31
7700000000003350032
167áâà32,167áâà33,167áâà36,167áâà37
7700000000003350033
167áâà38,167ª4,167,168,169áâà17,170
7700000000003350034
71ª4áâà2,71,73áâà1,73áâà2,73áâà3
7700000000003350035
127238
170áâà1,170áâà2,170áâà3,170áâà4
7700000000003350036
170áâà13,171,172,174,174áâà8,176,182
7700000000003350037
182áâà1,182áâà2,182áâà3,182áâà4
7700000000003350038
182áâà5,182áâà6,182áâà7,182ª1,182
7700000000003350039
182áâà1,182áâà2,182áâà3,182áâà4
7700000000003350040
182áâà5,182áâà7,182áâà8,182áâà9
7700000000003350041
182áâà10,184,184áâà1,184áâà2,184áâà3
7700000000003350042
184áâà4,184áâà5,184áâà6,184áâà7
7700000000003350043
184áâà8,184áâà9,184áâà10,184áâà11
7700000000003350044
184áâà12,184áâà13,184áâà14
7700000000003350045
58,58áâà1,58áâà3,58áâà3,58áâà4,58áâà5
7700000000003350046
58áâà6,58áâà7,58áâà8,58áâà9,58áâà10
7700000000003350047
58áâà11,58áâà12,58áâà13,58áâà14
7700000000003350048
58áâà15,58áâà16,58áâà17,58áâà18
7700000000003350049
58áâà19,58áâà20,58áâà21,58áâà22
7700000000003350050
58áâà23,58áâà24,58áâà25,58áâà26
7700000000003350051
58áâà27,58áâà28,58áâà29,58áâà30
7700000000003350052
58áâà31,58áâà32,58áâà33,58áâà34
7700000000003350053
58áâà35,58áâà36,58áâà37,58áâà38
7700000000003350054
58áâà39,58
7700000000003350055
67áâà1,67áâà2,67áâà3,67áâà4,67áâà5
7700000000003350056
67áâà6,67áâà7,67áâà8
7700000000003350057
24,24áâà2,24áâà6,24áâà7,24áâà1,26,28
7700000000003350058
45277592000
30ª1,30,32ª1,32ª1áâà2,32ª2,32ª3,34ª1
7700000000003350059
34ª2,36ª1,36ª2,36ª2áâà2,38ª1,38
7700000000003350060
40áâà2,40ª1,42,42áâà1,44ª1,44ª1áâà2
7700000000003350061
44ª2,44ª2áâà1,44ª3,44ª3áâà1,44ª3áâà2
7700000000003350062
46ª1,46ª2,46ª2áâà2,46ª2áâà3,46ª2áâà4
7700000000003350063
48ª1,48ª2,49ª1,49ª1áâà1,49,50ª1
7700000000003350064
50ª1áâà2,51ª1,51ª1áâà2,51ª2,52ª1
7700000000003350065
52ª1áâà2,52ª2,52,53áâà3,53ª1,54ª1
7700000000003350066
54ª2,55ª1,55ª2,56,56áâà2,56ª1áâà1
7700000000003350067
56ª1áâà2,56áâà1,57ª1,57ª2,59ª1,59
7700000000003350068
61ª1,63ª1,63ª1áâà1,63ª2,63ª2áâà1,65
7700000000003350069
65áâà2,65áâà3,65áâà4,65ª1,65ª2,65áâà1
7700000000003350070
65áâà1,65áâà1
7700000000003350071
69áâà3,71áâà1,71áâà2,71ª2áâà1,71ª2áâà2
7700000000003350072
71ª2áâà3,71ª2áâà4,71ª2áâà5,71ª2áâà6
7700000000003350073
71ª3áâà1,71ª3áâà2,71ª3áâà3,71ª3áâà4
7700000000003350074
71ª3áâà6,71ª3áâà9,71ª3áâà10,71ª3áâà11
7700000000003350075
71ª4áâà1,71ª4áâà2,71ª4áâà3,71ª4áâà4
7700000000003350076
71ª4áâà5,71ª4áâà6,71ª5,71ª5áâà2
7700000000003350077
71ª5áâà3,71ª5áâà4,71ª5áâà6,71ª5áâà7
7700000000003350078
73áâà4,73áâà5,73áâà6,75,75áâà2,75áâà4
7700000000003350079
75áâà7,75ª3áâà1,75ª3áâà3,75ª3áâà4
7700000000003350080
75ª3áâà5,75ª3áâà6,77áâà1,77áâà2,77,79
7700000000003350081
79áâà1,79áâà3,79áâà4,81,81áâà2,81áâà3
7700000000003350082
81áâà5,81áâà6,81áâà7,81áâà8,81áâà9
7700000000003350083
81áâà10,83,83áâà2,83áâà4,83áâà5
7700000000003350084
83áâà7,83áâà8,83áâà9,83áâà10
7700000000003350085
83áâà11,85,85áâà1,87,87áâà2,87áâà3
7700000000003350086
87áâà5,87áâà6
7700000000003350087
94ª1,96áâà1,96áâà2,96ª1,96ª1áâà1
7700000000003350088
127247
86áâà1,86ª1,86ª2,86ª3,86ª3áâà1,86ª4
7700000000003350089
86ª5,88ª1,88ª2,90ª1,90ª2,90ª2áâà1,92
7700000000003350090
96ª1áâà2,96ª2,96ª3,96ª3áâà2,96ª4,96ª5
7700000000003350091
96ª6áâà1,96ª6áâà3,96ª7,96,99ª1,99ª2
7700000000003350092
99ª2áâà2,101ª1,101,103,105ª1,105ª2
7700000000003350093
105ª3,105ª4,105ª4áâà1,105ª5,105ª6
7700000000003350094
116áâà6,116áâà7,116áâà9,116áâà10
7700000000003350095
127253
98,98áâà1,98áâà6,98áâà9,98áâà11
7700000000003350096
45277568000
107áâà1,107áâà1,107áâà2,107áâà2
7700000000003350097
107áâà3,107áâà3,107áâà3,107áâà4
7700000000003350098
107áâà4,107áâà4,107áâà5,107áâà5
7700000000003350099
107áâà6,107áâà6,107áâà7,107áâà7
7700000000003350100
107áâà8,107áâà9,107áâà10,107áâà11
7700000000003350101
107áâà11,107áâà12,107áâà12,107áâà13
7700000000003350102
107áâà13,107áâà14,107áâà14,107áâà15
7700000000003350103
107áâà15,107áâà16,107áâà16,107áâà17
7700000000003350104
107áâà17,107áâà18,107áâà18,107áâà19
7700000000003350105
107áâà19,107áâà20,107áâà20,107áâà21
7700000000003350106
107áâà21,107áâà22,107áâà23,107áâà23
7700000000003350107
107áâà24,107áâà24,107áâà25,107áâà25
7700000000003350108
107áâà26,107áâà27,107áâà28,107áâà42
7700000000003350109
107áâà44,107áâà45,107áâà46,107áâà47
7700000000003350110
107áâà48,107áâà49,107áâà67,107áâà72
7700000000003350111
107áâà91,107áâà92,107,107
7700000000003350112
116ª4,116ª4áâà2,116ª4áâà3
7700000000003350008
116,116áâà2,116áâà3,116áâà4,116áâà5
7700000000003350113
116áâà11,116áâà12,116áâà13,116áâà14
7700000000003350114
116áâà15,116,116,116,116áâà1,118
7700000000003350115
9áâà2,9áâà3,9áâà4,9ª1,9áâà1,9áâà2
7700000000003350117
127434
118,120áâà1,120áâà2,120ª1áâà1
7700000000003350118
120ª1áâà2,120ª2
7700000000003350119
109ª1,110,110áâà1,110áâà2,110áâà3
7700000000003350120
127411
110áâà5,110áâà6,110áâà7,110áâà8
7700000000003350121
110áâà9,110áâà10,110áâà11,110áâà12
7700000000003350122
110áâà13,110áâà14,110áâà15,110áâà16
7700000000003350123
110áâà17,110áâà18,110áâà19,110áâà20
7700000000003350124
110áâà21,110áâà22,110áâà23,110áâà24
7700000000003350125
110áâà25,110áâà26,110áâà27,110áâà28
7700000000003350126
110áâà29,110áâà30,110áâà31,110áâà32
7700000000003350127
110áâà33,110áâà34,110áâà35,110áâà36
7700000000003350128
110áâà39,110áâà40,110áâà41,110áâà42
7700000000003350129
110áâà43,110áâà44,110áâà45,110áâà46
7700000000003350130
110áâà47,110áâà48,110áâà49,110áâà50
7700000000003350131
110áâà51,110áâà52,110áâà53,110áâà54
7700000000003350132
110áâà55,110áâà56,110áâà57,110áâà58
7700000000003350133
110áâà59,110áâà60,110áâà61,110áâà62
7700000000003350134
110áâà63,110áâà64,110áâà65,110áâà66
7700000000003350135
110áâà67,110áâà68,110áâà69,110áâà70
7700000000003350136
110áâà71,110áâà72,110áâà73,110áâà74
7700000000003350137
110áâà75,110áâà76,110áâà77,110áâà118
7700000000003350138
110áâà119,110áâà120,110,110áâà2
7700000000003350139
110áâà3,110áâà4,110áâà5,110áâà15
7700000000003350140
110,110áâà1,110áâà1,110áâà2
7700000000003350141
110áâà1,111,111áâà1,113ª1,114áâà1
7700000000003350142
115ª1,117ª1,119ª1,121ª1,123ª1,125ª1
7700000000003350143
125ª2,127ª1,127ª2,129ª1,129ª2,131ª1
7700000000003350144
131ª2,131áâà1,133áâà1,133áâà2,133ª1
7700000000003350145
135ª1,135ª2,135áâà1,137,137ª1
7700000000003350146
137ª1áâà1,137,139,139áâà1,139áâà2
7700000000003350147
141ª1,143ª1,147áâà3,147ª2,149,149áâà1
7700000000003350148
151ª2,151ª3,151ª4,151ª5,153,153áâà1
7700000000003350149
155áâà1,155ª1,155ª2,155ª2áâà1,155ª3
7700000000003350150
157,157áâà1,157áâà3,157áâà4,157áâà5
7700000000003350151
157áâà6,157áâà7,157áâà8,157áâà9
7700000000003350152
157áâà10,157áâà11,157áâà12,157áâà13
7700000000003350153
157áâà14,157áâà15,157áâà16,157áâà17
7700000000003350154
157áâà18,157áâà19,157áâà20,157áâà21
7700000000003350155
159áâà1,159áâà2,159áâà3,159ª1áâà1
7700000000003350156
159ª1áâà2,159áâà1,159áâà2,159
7700000000003350157
159áâà1,159áâà1,159áâà2,159áâà3
7700000000003350158
159áâà4,159áâà1,159,159,159
7700000000003350159
1ª1,2áâà1,2áâà3,2áâà4,3ª1,3ª2,5áâà2
7700000000003350160
5ª1,5,5áâà1,5áâà2,7ª1,7ª2,7ª2áâà2,9
7700000000003350161
157áâà22,157áâà23
7700000000003350162
9áâà3,9áâà4,9áâà5,9,9áâà2,11
7700000000003350163
11áâà,11áâà,11áâà1,11áâà2,11áâà3
7700000000003350164
11áâà3,11áâà4,11áâà5,11áâà6,11áâà7
7700000000003350165
11áâà8,11,11áâà2,11,11áâà1,13áâà1
7700000000003350166
13áâà2,13áâà3,13áâà5,13áâà9,13áâà10
7700000000003350167
13ª1,13ª1áâà2,13ª2,13ª2áâà3,13ª2áâà4
7700000000003350168
13ª3,13ª4,13ª5,13,13ª1,13ª2,13ª3
7700000000003350169
72,74ª1,74ª2,74ª3,76ª1,80áâà1,80áâà2
7700000000003350170
127474
122ª1,122ª3,122ª4,122ª6,122ª9
7700000000003350171
122ª15
7700000000003350172
14áâà1,14áâà2,15,15ª1,15ª1áâà2,15ª2
7700000000003350173
60,60áâà1,60áâà2,60áâà3,60áâà6,60áâà7
7700000000003350174
60,60áâà1,60áâà2,60áâà3,60áâà4
7700000000003350175
60áâà5,60áâà6,60áâà1,62,62áâà4
7700000000003350176
62áâà5,62ª2,62ª2áâà1,62ª2áâà2,62ª2áâà3
7700000000003350177
62ª2áâà4,62,64ª1,64ª2,64ª3,64ª4,64ª5
7700000000003350178
64ª5áâà1,64ª6,64ª6áâà1,66,68,70ª1,70ª2
7700000000003350179
80,80áâà1,82,82áâà1
7700000000003350180
15ª2áâà1,15ª3,16áâà1,17ª1,17ª2
7700000000003350181
89ª1,89ª2,89ª3,89ª4,89,89áâà1,91
7700000000003350182
91áâà1,91,93,93ª1,93ª2,93ª3,95ª1,95ª2
7700000000003350183
95,95áâà2,97ª1
7700000000003350184
7700000000003350185
27ª1,27ª1áâà2,27ª2,27ª2áâà1,27ª3,27ª4
7700000000003350186
127550
27áâà1,29ª1,29ª1áâà2,29ª2,31,33áâà2
7700000000003350187
33ª1,33ª1áâà1,33ª2,33ª4,33ª4áâà1
7700000000003350188
33ª4áâà2,33ª5,33ª5áâà3,33ª6,33ª7,35ª1
7700000000003350189
37ª1,37ª1áâà1,37ª1áâà2,37,39áâà1,39ª1
7700000000003350190
39ª2,39ª2áâà2,41ª1,41ª1áâà2,41ª2
7700000000003350191
41ª2áâà1,43ª1,43ª1áâà2,43ª2,43áâà1
7700000000003350192
43áâà2,45ª1,45ª2,45ª2áâà2,45ª3,47
7700000000003350193
47áâà3,47áâà4,47áâà5,47ª2
7700000000003350194
102áâà8,102áâà1,102áâà2,104,108
7700000000003350195
127591
100,100áâà2,100áâà3,100ª2,100ª2áâà2
7700000000003350196
100ª2áâà3,100ª2áâà4,100ª2áâà6,102
7700000000003350197
102áâà2,102áâà3,102áâà4,102áâà6
7700000000003350198
102áâà7,102áâà8,102áâà9,102áâà10,102ª2
7700000000003350199
17ª2áâà1,19ª1,19ª2,19ª2áâà1,21áâà1
7700000000003350200
21ª1,21ª2,21,23ª1,25áâà1,25áâà4,25ª1
7700000000003350201
102ª2áâà2,102ª2áâà3,102ª2áâà4
7700000000003350202
102ª2áâà5,102ª2áâà16,102áâà1,102áâà2
7700000000003350203
102áâà3,102áâà4,102áâà6,102áâà7
7700000000003350204
108áâà2,108áâà3,108áâà3,108áâà4
7700000000003350205
108áâà1,108áâà1
7700000000003350206
108áâà5,108áâà6,108áâà7,108áâà8
7700000000003350207
108áâà9,108áâà10,108áâà11,108áâà13
7700000000003350208
1áâà1,1áâà2,1áâà3,1ª1,1ª2,1_áâà2,1
7700000000003360001
1áâà1,1áâà2,1áâà3,1áâà4,1áâà6,1
7700000000003360002
1áâà2,1,1áâà1,1áâà1,1áâà1,1áâà2
7700000000003360003
1áâà5,2,2áâà1,2áâà3,2áâà4,2áâà5,2áâà6
7700000000003360004
2áâà8,2áâà10,2áâà11,2áâà12,2áâà1
7700000000003360005
2áâà2,2áâà3,2áâà4,2,2áâà1,3,5,7ª1
7700000000003360006
7ª1áâà1,7ª2,8áâà1,8áâà2,8áâà3,9,11
7700000000003360007
11áâà2,11ª1,11ª1áâà1,11ª1áâà4,11ª2
7700000000003360008
11ª3,13
7700000000003360009
9áâà1,9áâà2,9áâà44,9áâà45,9áâà52
7700000000003370001
9áâà53,9áâà54,9áâà55,9áâà56,9áâà57
7700000000003370002
9áâà58,9áâà1,9áâà1,9áâà2,9áâà3
7700000000003370003
9áâà4,9áâà4,9,13,13áâà2,13áâà3
7700000000003370004
13áâà4,13áâà5,13áâà6,13áâà7,13áâà8
7700000000003370005
13áâà9,13áâà10,13áâà11,13áâà12,13áâà13
7700000000003370006
13áâà14,13áâà16,13áâà17,13áâà18
7700000000003370007
13áâà19,13áâà20,13áâà21,13áâà22
7700000000003370008
13áâà23,13áâà25,13áâà26,13áâà27
7700000000003370009
13áâà28,13áâà29,13áâà30,13áâà32
7700000000003370010
13áâà33,13áâà35,13áâà36,13áâà42
7700000000003370011
13áâà95,13/19áâà2,13/19áâà143,13
7700000000003370012
13áâà2,13áâà3
7700000000003370013
7áâà43
7700000000003370014
7,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5,7áâà6
7700000000003370015
7áâà7,7áâà8,7áâà9,7áâà10,7áâà11,7áâà12
7700000000003370016
7áâà13,7áâà15,7áâà16,7áâà17,7áâà18
7700000000003370017
7áâà19,7áâà21,7áâà24,7áâà30,7áâà31
7700000000003370018
7áâà32,7áâà33,7áâà36,7áâà37,7áâà38
7700000000003370019
7áâà52,7áâà54,8áâà1,8áâà2,8áâà3,8áâà4
7700000000003370020
7700000000003370021
8,8áâà1,8áâà2,8áâà3,8
7700000000003370022
5áâà1
7700000000003370023
1,1áâà1,3,3áâà2,3áâà3,3áâà4,3áâà5
7700000000003370024
3áâà6,3áâà7,3áâà8,3áâà9,5,5áâà2,5áâà3
7700000000003370025
5áâà4,6,6áâà2,6áâà3,6áâà4,6áâà5,6áâà7
7700000000003370026
6áâà8,6áâà9,6áâà10,6áâà11,6áâà13
7700000000003370027
6áâà27,6áâà28,6áâà29,6áâà30,6áâà31
7700000000003370028
6áâà32,6áâà33,6áâà34,6áâà35,6áâà36
7700000000003370029
6áâà37,6áâà38,6áâà39
7700000000003370030
15,15áâà2,15áâà3,15áâà4,15áâà5
7700000000003370031
15/16áâà6,18áâà1,20áâà1,21,21áâà2,21áâà3
7700000000003370032
10áâà2
7700000000003370033
34áâà1,37/18,39,41,42áâà1,42áâà2,43
7700000000003380001
43áâà2,43áâà3,45ª2,45ª2áâà1,45ª3
7700000000003380002
45ª3áâà1,45ª4,45ª5,45ª6,45,47,49ª1
7700000000003380003
49ª2áâà2,49ª4,49ª5,49ª5áâà2,51,51áâà2
7700000000003380004
53ª1,53ª3,55,57ª1,57ª1áâà1,57ª2,57ª3
7700000000003380005
57ª4,59,59ª1,59ª1áâà1,61,65,65ª2
7700000000003380006
65ª2áâà2,67áâà1,67ª1,67ª2,67ª2áâà1
7700000000003380007
67ª2áâà2,67ª2áâà3,67ª2áâà4,67ª3,69
7700000000003380008
23ª1,23ª2,23ª3,23ª4,23ª5,24,24áâà2,24
7700000000003380010
25,26,26áâà1,26áâà2,26ª1,26ª2,26ª2áâà1
7700000000003380011
26ª2áâà2,26ª3,26ª4,27,27,27áâà2,28ª2
7700000000003380012
29,31,33
7700000000003380013
1,1ª2,1ª2áâà1,1ª3,2ª1,2ª2,3,4,4áâà1,5
7700000000003380014
125635
6,6áâà1,6áâà2,7ª1,7ª1áâà1,7ª2,8,8áâà1
7700000000003380015
10,10áâà2,13,13áâà2,15,16,16áâà2,17
7700000000003380016
18,18áâà2,20ª1,20ª1áâà2,20ª2,20ª3,20
7700000000003380017
21,21áâà2,21áâà3,21áâà4,22ª1,22ª1áâà1
7700000000003380018
22ª2,22ª2áâà1,22ª3,22ª4,22ª5,22
7700000000003380019
7700000000003390001
7700000000003390002
1áâà14,1áâà15,1áâà16,1áâà17,1áâà18
7700000000003390003
1áâà19,1áâà20,1áâà21,1áâà22,1áâà23,4
7700000000003390004
4áâà1,4áâà2,4áâà3,4áâà5,4áâà6,4áâà7
7700000000003390005
7700000000003390006
4áâà13,4áâà14,4áâà15,4áâà16,4áâà18
7700000000003390007
4áâà19,4áâà20,4áâà21,4áâà22,4áâà23
7700000000003390008
4áâà24,4áâà25,4áâà26,4áâà27,4áâà28
7700000000003390009
4áâà34,4áâà35,5,5áâà1,5áâà2,5áâà3
7700000000003390010
5áâà4,6,7,7áâà1,7áâà2,7áâà3,7áâà4
7700000000003390011
7áâà5,7áâà6,7áâà7,7áâà8,7áâà9,8ª2
7700000000003390012
8ª3,8,8áâà1,8áâà2,9,9áâà1,9áâà2
7700000000003390013
9áâà3,9áâà4,9áâà7,9áâà8,9áâà11,9áâà1
7700000000003390014
9áâà2,9áâà3,9áâà5,9áâà6,9áâà7
7700000000003390015
9áâà8,9áâà9,9áâà10,9áâà11,9áâà12
7700000000003390016
10,10áâà1,10áâà2,10áâà2,10áâà3
7700000000003390017
10áâà3,10áâà4,10áâà5,10áâà9,10áâà10
7700000000003390018
10áâà11,10áâà12,11,11áâà2,11áâà3
7700000000003390019
11áâà4,11áâà5,11áâà7,11áâà8,11áâà9
7700000000003390020
11áâà16,11áâà18,11áâà19,11áâà21,12
7700000000003390021
12áâà1,12áâà3,12áâà4,12áâà5,12áâà8
7700000000003390022
12áâà12,12áâà13,12áâà14,12áâà15,13áâà1
7700000000003390023
13áâà2,13áâà3,13áâà5,13áâà6,13áâà7
7700000000003390024
13áâà8,13áâà9,13áâà10,13áâà11,13áâà12
7700000000003390025
13áâà13,13áâà14,13áâà15,13áâà16
7700000000003390026
13áâà17,13áâà20,14,14áâà2,14áâà3
7700000000003390027
14áâà4,14áâà5,14áâà6,14áâà7,14áâà8
7700000000003390028
14áâà9,14áâà10,14áâà11,14áâà12,14áâà13
7700000000003390029
14áâà14,14áâà15,14áâà16,14áâà17,15áâà1
7700000000003390030
7700000000003390031
15áâà8,15áâà11,15áâà1,15áâà2,15áâà3
7700000000003390032
15áâà4,15áâà5,17áâà1,17áâà2,17áâà3
7700000000003390033
17áâà4,17áâà5,17áâà6,17áâà7,17áâà8
7700000000003390034
17áâà9,17áâà10,17áâà11
7700000000003390035
1áâà1,3,3áâà1,3áâà2,3áâà3,3áâà4
7700000000003410001
3áâà5,3áâà6,5,7,9,21,21áâà1,21áâà2
7700000000003410002
25,25áâà2,25áâà3,25áâà4,25áâà5
7700000000003410003
1,1áâà1,1áâà3,1áâà4,1áâà5,1áâà6,1áâà7
7700000000003420001
1áâà9,1,1áâà1,1áâà2,1áâà3,1áâà4
7700000000003420002
1áâà5,1áâà6,1áâà1,1áâà2,1áâà3
7700000000003420003
1áâà4,1áâà5,2,2áâà2,2áâà3,2áâà4
7700000000003420004
2áâà5,2áâà7,2ª1,2ª1áâà1,2ª1áâà6,2
7700000000003420005
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000003420006
2áâà6,2áâà7,2áâà8,2áâà9,2áâà10,3
7700000000003420007
3áâà2,3áâà3,3áâà4,4ª1,4ª2,4ª3,4ª3áâà1
7700000000003420008
4ª3áâà2,4ª4,4ª5,4ª6,4ª7,4,4,6áâà1
7700000000003420009
6ª1,6ª1áâà1,6ª1áâà2,6ª1áâà3,6ª2
7700000000003420010
6ª2áâà3,6ª2áâà4,6ª3,6ª3áâà2,6ª4,6,8
7700000000003420011
8ª1,10,10áâà1,10áâà2
7700000000003420012
1,4,6ª1,6ª2,8,10,10áâà2,10áâà3,10áâà4
7700000000003430001
10áâà5,10áâà6,10áâà7,14,14áâà1
7700000000003430002
3áâà1,20,22,22,22,22,22,22,24
7700000000003440001
24áâà1,24áâà2,24áâà3,24,24,24
7700000000003440002
24,26,26áâà1
7700000000003440003
1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà5
7700000000003440004
1áâà6,4ª1,4,4,6/27,8/24,10,10áâà1
7700000000003440005
10áâà2,10áâà3,12,14,14áâà1,14áâà3,15
7700000000003440006
15áâà1,15áâà2,15áâà4,15áâà5,15áâà6
7700000000003440007
15áâà7,15áâà8,15áâà9,15áâà10,15áâà11
7700000000003440008
15áâà12,15áâà13,15áâà14,15áâà15
7700000000003440009
15áâà16,15áâà17,15áâà18,15áâà19
7700000000003440010
15áâà20,15áâà21,15áâà33,16,16áâà2,20
7700000000003440011
20áâà1,20áâà2,20áâà3
7700000000003440012
3ª1,4,4áâà1,4áâà2,4áâà3,5,8,8,10,14
7700000000003450001
14áâà1,17/9,18,19,20,20,21,25ª1,25ª2
7700000000003450002
1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà5
7700000000003460001
1áâà6,1áâà7,1áâà8,2,2áâà2,2ª1,3
7700000000003460002
4,4áâà2,4áâà3,4áâà4,4áâà5,4áâà6,4áâà7
7700000000003470001
4áâà8,4áâà9,4áâà10,4áâà12,4áâà13
7700000000003470002
4áâà14,4áâà15,5,6,8,8áâà1,8áâà2,8áâà3
7700000000003470003
7700000000003470004
7700000000003470005
8áâà15,12áâà1
7700000000003470006
3áâà1,3áâà2,3áâà3,3áâà5,3,5,5áâà2
7700000000003470007
5áâà3,5áâà4,5áâà5,5áâà6,5áâà7,5áâà8
7700000000003470008
5áâà9,5áâà10,7,7áâà2,7áâà3,7áâà4,7áâà5
7700000000003470009
7áâà1,7áâà2,7áâà3,8,8áâà1,9,9áâà1
7700000000003470010
9áâà2,9áâà3,9áâà4,9áâà5,9áâà6,9áâà7
7700000000003470011
9áâà8,11áâà1,11áâà2,11áâà3,11áâà4
7700000000003470012
1,1áâà1,1áâà3,1áâà5,1ª1,1ª1áâà2
7700000000003480001
125438
45277571000
1ª1áâà3,1ª1áâà4,1ª1áâà5,1,1áâà1
7700000000003480002
1áâà2,1áâà2,1áâà3,1áâà4,1áâà5
7700000000003480003
1áâà6,1áâà7,1áâà15,1áâà17,5,5áâà1
7700000000003480004
7,9,15áâà1,15áâà2,15áâà3,15áâà4,15áâà5
7700000000003480005
15áâà6,15áâà7,15áâà8,15áâà9,19
7700000000003480006
23,24,24áâà1,24áâà2,24áâà4,24áâà5
7700000000003490001
125413
7700000000003490002
24áâà12,24áâà16,24áâà18,25,25áâà3
7700000000003490003
26áâà1,26áâà2,26áâà3,26áâà4,26áâà5,26
7700000000003490005
26áâà1,26áâà3,26áâà4,26áâà5,27
7700000000003490006
28/1,29,30,31,32áâà1,32/72,32áâà1,33
7700000000003490007
34ª1,34ª1áâà2,34ª2,35áâà3,35áâà5,35ª1
7700000000003490008
35ª2,35ª3,35ª4,37,39,41,43/70
7700000000003490009
45/19,47,49
7700000000003490010
45277595000
36,36áâà1,38ª1,38ª2,38ª3,38ª3áâà2,40
7700000000003490011
125414
42/36
7700000000003490012
51ª1,53ª1,53ª2,53ª2áâà2,53ª3,53ª3áâà2
7700000000003490013
53ª4,53ª4áâà3,53ª4,57/34
7700000000003490014
1/2,2,2áâà2,2áâà4,2ª1,2ª1áâà1,2ª3,2,3
7700000000003490015
3áâà3,5,5áâà3,5áâà4,5,6,7áâà6,7ª1,7ª2
7700000000003490016
8,8áâà1,8áâà2,8áâà5,8áâà6,8áâà7,8áâà8
7700000000003490017
7700000000003490018
8áâà15,8áâà17,8áâà18,8áâà19,8áâà20
7700000000003490019
8áâà21,8áâà22,8áâà23,8áâà24,8áâà26
7700000000003490020
8áâà27,8áâà28,8áâà29,8áâà30,8áâà31
7700000000003490021
8áâà32,8áâà33,8áâà34,8áâà35,8áâà36
7700000000003490022
7700000000003490023
8áâà42,8áâà60,8áâà61,8áâà62,8áâà63
7700000000003490024
8áâà64,8áâà65,8áâà66,8áâà67,8áâà68
7700000000003490025
8áâà69,8áâà70,8áâà71,8áâà72,8ª2,8ª3
7700000000003490026
8ª8,8ª13,8ª16,8ª25,9/4,9/4ª,9/4ª
7700000000003490027
11/11,11/11áâà2,12,12áâà1,12ª1,12ª2,13
7700000000003490028
13ª1,13ª1áâà1,14ª2,14ª2áâà1,14ª2áâà2
7700000000003490029
14,15,15,15áâà2,16ª4,16ª4áâà1,17
7700000000003490030
17áâà6,17ª4,17ª5,18,18ª1,18ª3,18ª3áâà3
7700000000003490031
18ª4,19/38,20,20áâà1,22,22áâà1,22áâà3
7700000000003490032
1/9,1/9áâà3,1/9áâà4,1/9áâà5,3,4,5,6
7700000000003500001
6áâà1
7700000000003500002
21,23,23áâà1,23ª1,25,25áâà1,25,27
7700000000003510001
27áâà1,27áâà3,27,27áâà1,29ª1
7700000000003510002
29ª1áâà2,29ª2,29ª3,29ª3áâà2,29áâà1,31
7700000000003510003
33,35,37,64,66ª1,66ª2,66ª3,68,72
7700000000003510004
72áâà1,74,74áâà2,76,76ª2,76ª2áâà1,78
7700000000003510005
78ª1,80/7,82/6,82/6áâà1,84,84áâà1,86
7700000000003510006
90,92,94,94áâà2,96,98
7700000000003510007
15áâà1,15áâà2,15ª1,15ª2,15,15áâà1
7700000000003510008
17áâà2,17ª1,17ª2
7700000000003510009
14,14áâà1,16,16áâà2,18,20,20áâà2,22,24
7700000000003510010
125493
26,28ª1,28ª1áâà2,28ª2,34áâà2,34áâà4
7700000000003510011
34áâà7,34ª1,34ª2,34ª3,36,38/27
7700000000003510012
3,3áâà2,5ª,5ª,5ª,5áâà1,5ªáâà2,5ª1
7700000000003510013
45277583000
5ª1áâà1
7700000000003510014
44,46,48áâà2,48ª1,48ª2,48,48,50
7700000000003510015
125499
50áâà2,52ª1,52ª2,52ª3,52ª4,54,54,56
7700000000003510016
58ª1,60,62,62áâà2,62áâà3,62,62áâà2
7700000000003510017
1,1áâà2,1,1áâà1,1áâà2
7700000000003510018
125565
2,4,6áâà1,6/21
7700000000003510019
9áâà1,9áâà2,9ª1,9ª1áâà1,9áâà1,11,13ª1
7700000000003510021
125581
13ª1áâà2,13ª1áâà3,13ª1áâà4,13ª2,13ª3
7700000000003510022
13ª3áâà1,13ª4,13ª5
7700000000003510023
30/32ª1,32,34,34áâà3,34áâà6,34
7700000000003520001
125130
45277580000
34áâà1,34,36,36,36,36áâà1,38,40
7700000000003520002
40ª1,42
7700000000003520003
1áâà1,3áâà1,3áâà2,3ª1,3/2,3/2áâà7,5
7700000000003520004
45277565000
7áâà6,7áâà8,7ª1,7ª2,7ª3,7ª4,7,9ª1,9ª2
7700000000003520005
9ª3,9ª3áâà3,9ª4,10,11,11áâà1
7700000000003520006
11_15áâà1,11,13,14áâà2,14/10,16ª1
7700000000003520007
16ª2,17/2,18ª1,18ª2,19,19áâà1,20,22
7700000000003520008
22áâà1,22ª1,22ª2,22ª2áâà1,22ª3,24
7700000000003520009
26/21áâà1,26/21áâà3,26/21áâà4
7700000000003520010
23,23áâà2,25/34,27,27áâà1,29,31ª1,31ª2
7700000000003520011
31ª3,33,34áâà1,35/1,35,37/2,39,39áâà2
7700000000003520012
4áâà2,4ª1,4ª2,4ª3,4,6,6,8áâà2,8áâà3
7700000000003520013
125171
8áâà5,8áâà6,8ª1,8ª2,8ª3,8áâà1
7700000000003520014
2,2áâà1,3,4áâà1,4áâà2,4áâà3,4áâà4
7700000000003530001
4áâà5,4áâà6,4áâà7,4áâà8,4áâà9,4áâà10
7700000000003530002
4áâà11,4áâà12,4áâà13,4áâà16,4áâà17
7700000000003530003
7700000000003530004
4áâà24,4áâà25,4áâà26,4áâà27,4áâà29
7700000000003530005
4áâà30,4áâà31,4áâà33,4áâà34,4áâà35
7700000000003530006
4áâà36,4áâà37,4áâà40,4áâà41,4áâà44
7700000000003530007
4áâà45,4áâà1,4áâà3,4áâà4,4áâà5
7700000000003530008
4áâà6,5ª1,6ª1,6ª2,7ª1,8,8,9/1ª1
7700000000003530009
9/1ª2,10,11,12,13,13áâà2,13,13áâà1
7700000000003530010
14ª1,14ª1áâà1,14ª2,14ª2áâà1,15,15ª1
7700000000003530011
15ª2,16/1,17,17,18,19,19áâà1,19áâà2
7700000000003530012
21,22,22áâà,22áâà1,22ª2,22ª2áâà1,22
7700000000003530013
22áâà1,23ª1,23ª2,24,24ª3,24ª3áâà6,24
7700000000003530014
15ª1,15ª2,15ª2áâà2,15ª2áâà3,15ª3,15ª4
7700000000003540001
125195
17,17áâà2,17ª1,17ª1,19,19áâà3,21,23
7700000000003540002
23áâà2,25,27,29,31,33,35,35,35,37
7700000000003540003
39ª1,39ª1áâà2,39áâà1,39áâà2,39áâà4
7700000000003540004
39áâà6,39áâà10,39ª2,41,43
7700000000003540005
47,47
7700000000003540006
46ª1,46ª1áâà1,46ª2,46ª3,52,52áâà1,52ª1
7700000000003540007
36áâà1,38,40,40áâà2,42,44,44áâà2
7700000000003540008
44áâà1,48,48ª2,48ª2áâà1,48áâà19
7700000000003540009
48áâà20,48áâà21,48áâà22,48áâà23
7700000000003540010
48áâà24,48áâà25,48áâà26,48áâà27
7700000000003540011
48áâà28,48áâà29,48áâà30,50áâà1,50áâà2
7700000000003540012
26,28,28áâà1,28áâà2,30,30ª2,32ª1,73ª1
7700000000003540013
73ª2,73ª3,73ª3áâà1,75,77,77ª1,79áâà1
7700000000003540014
51,51ª1,51ª1áâà1,53áâà2,53áâà3,53ª1
7700000000003540015
125502
53ª1áâà2,53ª2,53ª3,53ª3áâà2,53ª4,53ª5
7700000000003540016
53ª6,53,53áâà3,55,57,59ª1,59ª2,59ª3
7700000000003540017
59ª3áâà1,59ª3áâà3,59ª4,61,61,61,63ª1
7700000000003540018
63ª2,63ª2áâà1,63ª3,65,65áâà2,65áâà3,67
7700000000003540019
67áâà3,69,69áâà2
7700000000003540020
2,2,3,4,4áâà2,4áâà3,4ª2,4ª3,4ª3áâà6
7700000000003540021
4áâà1,5,5áâà2,5áâà3,6áâà1,6áâà2
7700000000003540022
6áâà1,7,7,9,9áâà2,9áâà3,9áâà4,11
7700000000003540023
11áâà1,11áâà2,11áâà3,11áâà1,13ª1,13ª2
7700000000003540024
13ª2áâà1,13ª2áâà2,13ª3,13,13áâà1
7700000000003540025
8,8áâà1,8áâà2,8áâà4,8áâà11,8,8áâà1
7700000000003540027
12,14,16,16,18,20,20ª2,22áâà2,22áâà6
7700000000003540028
22ª1,22ª1áâà1,22ª2,22ª3,22ª4,22ª4áâà1
7700000000003540029
22ª4áâà2,22ª5,22ª6,22ª7,22ª7áâà1
7700000000003540030
22ª7áâà2,22ª8,24,24ª2,24,24áâà1
7700000000003540031
24áâà2,26
7700000000003540032
1,1áâà2,2,2áâà1,2áâà2,2áâà3,2áâà5
7700000000003550001
2áâà6,2áâà7,2áâà8,2áâà9,2áâà10,2áâà11
7700000000003550002
2áâà12,2áâà15,2áâà16,2áâà17,2áâà18
7700000000003550003
2áâà19,2áâà20,3,3áâà2,3áâà3,3áâà4,3ª1
7700000000003550004
3ª1áâà2,3,4,4áâà2,4áâà3,4áâà4,4áâà7
7700000000003550005
4áâà10,4áâà12,4áâà13,4áâà14,4áâà15
7700000000003550006
7700000000003550007
4áâà1,5,5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000003550008
5áâà6,5áâà7,5áâà8,5áâà9,5áâà10,5áâà11
7700000000003550009
5áâà12,5áâà13,5áâà15,5áâà16,5áâà18,6
7700000000003550010
6áâà2,6áâà3,6áâà5,6áâà6,6áâà8,6áâà9
7700000000003550011
6áâà11,6áâà12,6áâà20,6áâà21,6áâà23
7700000000003550012
6áâà25,6áâà26,6áâà27,6áâà28,6áâà29
7700000000003550013
6áâà32,6áâà52,6áâà57,6áâà58,6áâà60
7700000000003550014
6áâà71,6áâà82,6áâà94,6áâà95,6áâà1
7700000000003550015
6áâà2,6áâà3,6ª1,9,9áâà2,9áâà3,9áâà4
7700000000003550016
11ª1,13,13áâà1,13áâà3,13áâà4,13áâà5
7700000000003550017
13áâà6,13áâà7,15,15áâà2,15áâà3,15áâà4
7700000000003550018
7700000000003550019
15áâà10,15áâà11,15áâà15,15áâà26
7700000000003550020
15áâà27,15áâà28,15áâà29,17,17áâà2
7700000000003550021
17áâà3,17áâà4,17áâà5
7700000000003550022
7700000000003560001
1áâà7,1áâà8,1áâà9,1áâà10,1áâà11,1,2
7700000000003560002
2,3,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000003560003
3áâà6,3áâà7,3áâà8,3áâà10,3áâà11,3áâà12
7700000000003560004
7700000000003560005
3áâà18,4,4áâà1,6,6áâà3,7,7áâà1,7áâà2
7700000000003560006
7áâà3,7áâà4,7áâà5,7áâà6,7áâà8,7áâà9
7700000000003560007
7áâà10,7áâà11,7áâà12,7áâà13,7áâà14,8
7700000000003560008
8áâà1,9áâà1,9áâà2,11,11áâà1,11áâà2
7700000000003560009
1ª1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà7
7700000000003570001
2áâà8,2áâà9,2áâà10,2áâà3,2áâà1
7700000000003570002
8áâà5,8,8áâà2,8áâà3,8áâà4,8áâà5
7700000000003570003
8áâà6,8áâà7,8áâà8,8áâà9,8áâà10
7700000000003570004
8áâà11,8áâà12,8áâà13,8áâà14
7700000000003570005
8áâà15,8áâà16,8áâà1,8áâà2,9,9áâà2
7700000000003570006
2áâà2,3,6,7,7áâà1,8,8áâà2,8áâà3,8áâà4
7700000000003570007
12,12áâà1,12áâà2,12áâà4,12áâà5,12áâà6
7700000000003570008
12áâà8,12áâà9,12áâà10,12,12áâà1
7700000000003570009
7700000000003570010
10áâà1,10áâà2,10áâà3,11
7700000000003570011
12áâà2,12áâà3,12áâà4,12áâà5
7700000000003570012
13áâà1,13áâà1,15,15áâà1
7700000000003570013
14áâà1,14áâà2,14áâà3,16,17,17ª1,17ª3
7700000000003570014
125475
17ª4,17ª5,17ª5áâà1,17ª5áâà2,17áâà1
7700000000003570015
18áâà1,18áâà2,18,18áâà1,18áâà2
7700000000003570016
18áâà3,18,18áâà2,18áâà3,18áâà4
7700000000003570017
12áâà6,12áâà7,12áâà8,12,12áâà1
7700000000003570018
18áâà5,18áâà6,18áâà1,18,18áâà1,19
7700000000003570019
19áâà2,19áâà3,19ª1,19ª1áâà1,21,21áâà1
7700000000003570020
21ª1,21ª2,21ª2áâà1,21ª3,23,23áâà1,23ª1
7700000000003570021
23ª2,23ª3,23ª3áâà1,23ª4,23ª4áâà1,23
7700000000003570022
25ª1,25ª1áâà1,25ª2,25ª4,25ª4áâà2,25
7700000000003570023
25áâà1,25áâà2,27ª2,27ª2áâà2,27ª2áâà3
7700000000003570024
27ª4,27,27áâà2,29,29,31ª1,31ª2,31ª3
7700000000003570025
31ª4,31ª5,31ª6,33áâà2,33ª1,33ª2,33ª3
7700000000003570026
33ª5,33ª6,33ª6áâà1,33ª7,33ª7áâà1
7700000000003570027
33ª7áâà2,33,33áâà2,33áâà3,35ª1
7700000000003570028
35ª1áâà1,35ª1áâà2,35ª2,35ª2áâà2,35ª3
7700000000003570029
35ª4,35ª5,35ª5áâà1,35ª5áâà2,35ª5áâà3
7700000000003570030
1áâà1,1/3,1/3áâà2,1/3áâà3,1/3áâà5
7700000000003580001
1/3áâà7,1/3áâà8,1/3áâà9,1/3áâà10
7700000000003580002
1/3áâà11,1/3áâà12,1/3áâà14,1/3áâà15
7700000000003580003
1/3áâà16,1/3áâà17,1/3áâà18,1/3áâà21,2
7700000000003580004
7700000000003580005
2áâà7,2áâà8,2áâà10,2áâà11,2áâà12
7700000000003580006
2áâà13,2áâà14,2áâà16,2áâà17,2áâà19
7700000000003580007
2áâà20,2áâà22,2áâà23,2áâà25,2áâà29
7700000000003580008
2áâà40,2áâà68,2áâà70,2áâà80,2ª46
7700000000003580009
2ª46áâà1,2áâà1,3ª1,3ª1áâà2,3ª1áâà3
7700000000003580010
3ª1áâà4,3ª1áâà7,3ª2,3ª2áâà1,3,3áâà2
7700000000003580011
3áâà3,3áâà4,3áâà5,3áâà6,3áâà7
7700000000003580012
3áâà8,3áâà9,3áâà11,3,3áâà1,3áâà2
7700000000003580013
3áâà3,3áâà4,4áâà1,4ª6,4áâà1,4áâà2
7700000000003580014
7700000000003580015
7700000000003580016
4áâà21,5,5áâà2,5áâà3,5áâà7,5áâà9
7700000000003580017
5áâà12,5áâà16,5áâà17,5áâà22,5áâà25
7700000000003580018
5áâà26,5áâà27,5áâà28,5áâà29,5áâà30
7700000000003580019
5áâà31,5áâà32,5áâà44,5áâà45,5áâà46
7700000000003580020
5áâà47,5áâà48,5áâà49,5áâà50,5áâà51
7700000000003580021
5áâà52,5,5,5áâà2,5áâà3,5áâà4
7700000000003580022
5áâà5,5áâà6,6,6áâà2,6,6,6áâà1
7700000000003580023
7áâà11,8,8áâà2,8áâà3
7700000000003580026
3áâà1,4áâà1,4áâà2,4áâà4,6áâà1,6áâà2
7700000000003590001
6áâà3,6áâà5,6áâà6,6áâà7,6áâà8,6áâà9
7700000000003590003
6áâà10,6áâà12,6áâà13,6áâà18,6áâà19
7700000000003590004
6áâà22
7700000000003590005
4áâà3
7700000000003590002
3ª1,3ª3,4,4áâà1,4áâà2,4áâà3,4áâà4
7700000000003600001
4áâà5,4áâà6,4áâà7,4áâà8,4áâà9
7700000000003600002
4áâà10,4áâà11,5ª1,5ª1áâà2,7,7,7,9
7700000000003600003
11,17,21,21áâà1,21áâà2
7700000000003600004
2ª2,3,3áâà2,3áâà6,3áâà7,3áâà8,3áâà9
7700000000003610001
3áâà10,3áâà12,3áâà1,3áâà2,3áâà3,4ª1
7700000000003610002
4ª2,5áâà2,5áâà3,5áâà4,5áâà6,5áâà7
7700000000003610003
5áâà1,5áâà2,5áâà3,6,6áâà2,6áâà3
7700000000003610004
6áâà4,7,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000003610005
7áâà6,7áâà1,8áâà1,8áâà2,9áâà1,9áâà2
7700000000003610006
9áâà3,11,11áâà2,11áâà3,11áâà5,11áâà6
7700000000003610007
11áâà7,11áâà8,11áâà9,11áâà11,11áâà14
7700000000003610008
11áâà15,11áâà16,11áâà17,11áâà18
7700000000003610009
11áâà19,11áâà20,11áâà21,11áâà22
7700000000003610010
11áâà22,11áâà23,11áâà24,11áâà25
7700000000003610011
11áâà26,11áâà27,13,13áâà1,13áâà2
7700000000003610012
7700000000003610013
13áâà9,13áâà10,13áâà11,13áâà14,13áâà15
7700000000003610014
13áâà16,13áâà17,13áâà18,13áâà19
7700000000003610015
13áâà20,13áâà21,13áâà22,13áâà23
7700000000003610016
13áâà24,13áâà25,13áâà26,13áâà27
7700000000003610017
13áâà28,13áâà29,13áâà30,13áâà31,13
7700000000003610018
13áâà2,13áâà3,13áâà4,13áâà5
7700000000003610019
13áâà6,14,14áâà3,14áâà3,14áâà4
7700000000003610020
14áâà4,14áâà5,14áâà6,14áâà7,14áâà9
7700000000003610021
14áâà13,14áâà14,14áâà1,15áâà1,16áâà1
7700000000003610022
7700000000003610023
16áâà7,16áâà10,16áâà11,18,18áâà2
7700000000003610024
18áâà3,18áâà4,18áâà10,18,20,20áâà2
7700000000003610025
20áâà1
7700000000003610026
1áâà1,3,5,15,15áâà2,28,30,32,32
7700000000003620001
125008
32áâà1,36,36áâà1,36áâà2,38ª1,38ª1áâà1
7700000000003620002
23,23áâà2,23áâà3,23áâà4,23áâà5,23áâà6
7700000000003620003
125183
23áâà7,23áâà8,23áâà9,23áâà10,23
7700000000003620004
23áâà1,29,29áâà2,29áâà3,29áâà6,29áâà7
7700000000003620005
29áâà8,29áâà21,29áâà22,29áâà23,29áâà1
7700000000003620006
7700000000003620007
7700000000003620008
29áâà11,29áâà12,29áâà13,29áâà14,31
7700000000003620009
31áâà7,31áâà8,31áâà9,46_48áâà1
7700000000003620010
46_48áâà2,46_48áâà3,46_48áâà4,46_48áâà5
7700000000003620011
17,23áâà1,40,40,40áâà1,42áâà1,44,46
7700000000003620012
46,46áâà1,46,46áâà1,48,50,50,52
7700000000003620013
52,54,54áâà14,54,54áâà1,56,56ª1
7700000000003620014
56/1áâà1,56áâà1,56áâà2,58,64áâà1
7700000000003620015
64ª1,64ª2,64ª2áâà1,64áâà1,64áâà2,64
7700000000003620016
64áâà1,66,68,68áâà2,70,72,72ª1,74
7700000000003620017
74áâà3
7700000000003620018
4,6áâà1,6áâà2,6áâà3,8,8áâà2,8áâà3
7700000000003620019
125239
8áâà4,8áâà5,8áâà6,12/9,14,16,18,20
7700000000003620020
20áâà4,22,24áâà1,24áâà1
7700000000003620021
3,4,5,5áâà2,5áâà3,5áâà4,5áâà5,6,8,10
7700000000003630001
7700000000003630002
11,11áâà1,11,13,15,15,16áâà4,16ª1
7700000000003630003
16ª1áâà1,16ª1áâà2,16ª2,16ª3,17,18,18ª1
7700000000003630004
18áâà1,18,18áâà2,19,21
7700000000003630005
19,19áâà2,23,23áâà2,23áâà4,25ª1,25ª2
7700000000003640001
25ª2áâà1,25ª2áâà4,27,27áâà2,29,29áâà2
7700000000003640002
29áâà4,29ª1,29,31,31áâà1,31áâà5,33
7700000000003640003
33áâà11,33áâà12,33áâà14,33áâà15
7700000000003640004
33áâà16,33áâà17,33áâà18,33áâà19
7700000000003640005
33áâà28,33áâà36,33áâà38,33ª1,33ª4,33ª5
7700000000003640006
33ª6,33ª9,33ª13,33ª17,33ª18,33ª19
7700000000003640007
33ª20,33ª21,33ª22,33ª24,33ª25,33ª27
7700000000003640008
33ª28,33ª31,33ª33,33ª33,33ª35,33ª35
7700000000003640009
33ª41,33ª43,33ª46,33ª47,33ª50,33ª51
7700000000003640010
33ª55,33ª57,33ª61,33ª72,33ª74,33ª76
7700000000003640011
33ª77,33ª80,33ª81,33ª84,33ª86,33ª87
7700000000003640012
20,20áâà1,22,22,22áâà2,22áâà3
7700000000003640013
22áâà4,22áâà5,22áâà6,22áâà7
7700000000003640014
22áâà8,22áâà10,22áâà11,22áâà12
7700000000003640015
22áâà13,22áâà14,22áâà15,22áâà16
7700000000003640016
22áâà17,22áâà18,24,25,26,26áâà3
7700000000003640017
26áâà5,26áâà6,26áâà7,26áâà8,26áâà9
7700000000003640018
26áâà1,26áâà2,26áâà3,26áâà4
7700000000003640019
26áâà5,26áâà6,26áâà7,26áâà8
7700000000003640020
26áâà9,26áâà10,28,28áâà2,28áâà3
7700000000003640021
28áâà1,28áâà2,28áâà3,28áâà4
7700000000003640022
28áâà5,28áâà6,28áâà7
7700000000003640023
2,4,4áâà3,4áâà4,4áâà5,4ª2,4,4áâà2
7700000000003640024
127299
3,3áâà2,5,5ª1,5ª1áâà1,5áâà2,5áâà3,7
7700000000003640025
7,9ª1,9ª2,11ª1,11ª2,13,15,17,17áâà2
7700000000003640026
17áâà3
7700000000003640027
18áâà1,18áâà1,18áâà2,18áâà2,18áâà3
7700000000003640028
18áâà4,18áâà5,18áâà6,18ª1,18ª2,18ª4
7700000000003640029
18ª5,18ª6,18ª7,18ª8,18ª9,18ª10,18ª11
7700000000003640030
18ª12,18ª13,18,18áâà1,18áâà2
7700000000003640031
18áâà1,18áâà2,18ª1
7700000000003640032
1,1áâà2,1áâà3,1áâà4,1áâà5,1,3
7700000000003650001
1,1,1áâà1,1áâà2,1áâà3,1áâà4
7700000000003660001
1áâà5,1áâà6,1áâà7,1áâà8,1áâà9
7700000000003660002
1áâà10,1áâà11,1áâà12,1áâà13
7700000000003660003
1áâà14,1áâà15,1áâà16,1áâà17
7700000000003660004
1áâà18,1áâà19,1áâà21,1áâà22
7700000000003660005
1áâà23,1áâà24,1áâà25,1áâà26
7700000000003660006
1áâà27,1áâà28,1áâà29,1áâà30
7700000000003660007
1áâà31,1áâà33,1,1áâà1,1áâà1
7700000000003660008
1áâà2,1áâà3,1áâà4,1áâà5,1áâà6
7700000000003660009
1áâà7,1áâà11,3,3,4,5,6áâà1,6ª1,7,8
7700000000003660010
9,9áâà2,9áâà3,9,10,11áâà2,11ª1,11ª2
7700000000003660011
11ª3,11ª4,11ª5,11ª5áâà2,12,13,15ª1
7700000000003660012
15ª2,15ª3,15,15áâà1,15áâà3,15áâà4
7700000000003660013
15áâà5,15áâà6,15áâà7,15áâà8
7700000000003660014
15áâà9,15áâà11
7700000000003660015
2,2áâà1,2áâà3,2áâà4,2áâà5,2áâà6,2áâà7
7700000000003660016
2áâà8,2áâà9,2áâà12,2áâà13,2áâà22
7700000000003660017
2áâà23,2áâà24,2áâà25,2áâà26,2áâà27
7700000000003660018
2áâà28,2áâà29,2áâà30,2áâà32,2áâà33
7700000000003660019
2áâà35,2áâà36,2áâà37,2áâà38,2
7700000000003660020
16,18,18áâà2,21,21áâà6,21áâà11,23
7700000000003660021
20,20,20áâà1,20áâà2,20,22,22áâà1
7700000000003670001
2,3,4áâà1,4áâà3,4áâà4,4áâà6,4áâà10
7700000000003680001
5áâà2,5áâà3,6,6áâà1,6áâà2,6áâà3,7
7700000000003680002
7áâà2,7áâà3,7áâà4,7áâà5,7áâà6,7áâà7
7700000000003680003
7áâà8,7áâà9,7áâà10,7áâà15,7áâà18
7700000000003680004
7áâà24,7áâà28,8áâà1,8áâà2,8áâà3,8áâà4
7700000000003680005
8áâà5,8áâà7,8áâà8,9,9áâà2,9áâà3
7700000000003680006
9áâà4,9áâà5,9áâà8,9áâà10
7700000000003680007
3ª1,3ª2,4,6,28/9
7700000000003690001
7,9,9áâà1,11,12,13,14,14áâà3,15,15áâà1
7700000000003690002
16,17,18,19,20,20,21,22,22,23/11,24,26
7700000000003690003
6,6áâà2
7700000000003700001
1áâà1,1áâà7,1ª4,1,1ª1,3,3áâà1,3áâà2
7700000000003700002
5ª1,5,6,7,10,10áâà2,10,10áâà1,14
7700000000003700003
16,16,16áâà2,18,18áâà1,20
7700000000003700004
8,10,16áâà1,16ª1,16ª2,18,18áâà2,18ª2
7700000000003710001
18ª1,18ª2,18ª3,18,18áâà1,20ª1
7700000000003710002
20ª2,20ª2áâà1,22,24áâà1,24áâà2,24áâà3
7700000000003710003
24áâà4,24áâà5,24áâà6,24áâà7,24áâà8
7700000000003710004
24áâà9,24áâà10,24áâà11,24áâà12,24áâà13
7700000000003710005
24áâà29,24,26áâà3,26ª1,26ª2,26ª3,26ª4
7700000000003710006
26ª5,26ª6,28ª1,28ª2,28ª3,30,30,32
7700000000003710007
32áâà2,32,34,34ª1,34ª2,36,41áâà4
7700000000003710008
41áâà5,41áâà6,41áâà7,41áâà8,63,63áâà2
7700000000003710009
63áâà3,63áâà4,63áâà6,63áâà7,63,65,65
7700000000003710010
65áâà1,65áâà2,65áâà3,65áâà4
7700000000003710011
65áâà5,65áâà6,67,67áâà3,67áâà7
7700000000003710012
69áâà1,69áâà2,69,69áâà1,69áâà1
7700000000003710013
69áâà2,69áâà2,69áâà3,69áâà3
7700000000003710014
69áâà4,69áâà4,69áâà5,69áâà6
7700000000003710015
69áâà7,69áâà8,69áâà14,69áâà15
7700000000003710016
69áâà2,71áâà1,71áâà2,71áâà3,71áâà1
7700000000003710017
73áâà1,73áâà2,73áâà3,73áâà5,73áâà6
7700000000003710018
73áâà5,73áâà6,73áâà7,73,73áâà2
7700000000003710019
73áâà3,73áâà4,75,75áâà1,75áâà4
7700000000003710020
75áâà6,75ª1,75ª1áâà1,75ª2,77
7700000000003710021
77áâà1,79/1,81/2,83ª1,83ª2,85,87,89
7700000000003710022
89ª4,89ª5,89ª8,89ª10
7700000000003710023
1,2/5,3,3,3áâà1,3áâà2,4,5,6,7,7,8
7700000000003730001
8ª1,9,10,11,12,12áâà2,13,14,15ª1,16
7700000000003730002
16,17,17áâà2,17,18,20,22,24
7700000000003730003
1,1áâà2,3
7700000000003740001
4áâà1,6,6áâà1,6,6áâà1,6áâà2,7,7
7700000000003740002
7áâà1,7áâà2,8,8,9,10,10,12,12,13
7700000000003740003
14áâà1,14áâà2,14áâà3,14áâà6,15,15áâà1
7700000000003740004
50,50áâà4,52,52
7700000000003760001
32,34áâà1,34áâà3,34áâà1,36áâà1,38
7700000000003760002
38áâà1,38áâà3,38áâà4,38áâà5,38áâà6
7700000000003760003
38áâà8,38,40,42,42áâà1,44,46ª1,46ª2
7700000000003760004
46ª3,48,48áâà2,48áâà3,48áâà4,48áâà5
7700000000003760005
48áâà5,48áâà7,48áâà8,48áâà9,48áâà10
7700000000003760006
48áâà11,48áâà12,48áâà29,48áâà37
7700000000003760007
48áâà38,48áâà39,48áâà40,48áâà42
7700000000003760008
48áâà44,48áâà44,48áâà46,48áâà47
7700000000003760009
48áâà50,48áâà55,48áâà56,48áâà58
7700000000003760010
50áâà1,50áâà3,52áâà13,52áâà18
7700000000003760011
52áâà22,52áâà23
7700000000003760012
1/51,1/51áâà1,2,2áâà2,2áâà3,3,4,4,5,6
7700000000003760013
7,7áâà2,7áâà3,7áâà4,7áâà6,7ª3,8,8
7700000000003760014
8áâà1,9,9áâà1,9áâà4,10,11,11áâà2
7700000000003760015
11áâà3,11,12,13,13ª1,13,13,14
7700000000003760016
14áâà2,15,15áâà2,15ª1,15ª1áâà1,15
7700000000003760017
16/1,17,17áâà2,18,18,20,20,22
7700000000003760018
22áâà1,24,24áâà1,24áâà2,26ª1,26ª2,28
7700000000003760019
57ª1,61áâà1,61áâà2,61áâà3,61áâà4
7700000000003760020
61áâà5,61áâà6,61áâà7,61áâà8,61áâà9
7700000000003760021
63áâà1,63áâà2,63áâà3,63áâà5,63áâà6
7700000000003760022
63áâà7,63áâà8,63áâà12,63áâà1,63áâà2
7700000000003760023
63áâà3,63áâà4,63áâà5,63áâà6,65áâà1
7700000000003760024
65áâà2,65áâà6,65áâà8,65ª1,65ª1áâà1
7700000000003760025
65ª1áâà1,65ª1áâà2,65ª1áâà3,65ª1áâà6
7700000000003760026
67ª1,67ª1áâà2,67ª1áâà3
7700000000003760027
24áâà1,24áâà2,26áâà1,26áâà2,28,28,30
7700000000003770001
30áâà2,30áâà3
7700000000003770002
17áâà1,36,38,38,40,40áâà2,40ª2,42
7700000000003770003
1,2,2áâà1,2,3,3áâà2,4,5,5áâà1,6,7,9
7700000000003770004
10,10áâà2,10áâà3,10áâà3,10áâà4,10áâà5
7700000000003770005
10áâà5,10áâà6,10áâà7,10áâà8,10áâà8
7700000000003770006
10áâà9,10áâà9,10áâà11,10,11,12áâà1
7700000000003770007
12áâà2,14,14áâà1,14,16ª1,16ª2,16ª3,22
7700000000003770008
4,6,8,10,12,12áâà2,12,14ª1,14ª2,16
7700000000003780001
16áâà5,18/12,20ª1,20ª2,22áâà1,22áâà2
7700000000003780002
22ª1,24ª1,24ª2,26/11,28,30ª1,30ª2,32
7700000000003780003
32áâà1,32áâà3,34,36
7700000000003780004
3,3áâà1,3áâà2,3ª1,5,7/20,9,9,11,11
7700000000003780005
13,13áâà2,13,15/9,17/14,19,19áâà2,21
7700000000003780006
21áâà1,23áâà1,23áâà2,23ª1,23ª2,27,29
7700000000003780007
29áâà2,29,31ª1,31ª2,31ª3,33ª1
7700000000003780008
2,3,3áâà1,3áâà2,4ª1,4ª2,5,5áâà1
7700000000003790001
5áâà2,6áâà1,6ª1,6ª2,7,8ª1,8ª1áâà1
7700000000003790002
8ª1áâà2,8ª2,8ª2áâà3,9,9,9,9áâà4,9
7700000000003790003
9áâà2,9,10,10áâà2,10,11,11,12ª1
7700000000003790004
12ª2,12ª3,13,13áâà2,13,13áâà2,13
7700000000003790005
13áâà1,13áâà2,14,14áâà2
7700000000003790006
56,58,62,62áâà2,62áâà3,62áâà4
7700000000003790007
111141
45263576000
62áâà5,62áâà8,62áâà9,62áâà10
7700000000003790008
62áâà13,62áâà14,62áâà15,62,64
7700000000003790009
64áâà3,64áâà4,64áâà5,64áâà6,64áâà9
7700000000003790010
64áâà10,64áâà11,64áâà22,64áâà23
7700000000003790011
38/18,40,40áâà2,42,44/10,44/10áâà2
7700000000003790012
46áâà4,46ª1,46ª2,46ª3,50ª1,50ª1áâà2
7700000000003790013
50ª2,50ª2áâà2,50ª3,52ª1,52ª1áâà2,52ª2
7700000000003790014
57,59áâà1,59/39
7700000000003790015
111394
45,45áâà1,47ª1,47ª2
7700000000003790016
111397
15ª1,15ª2,15ª3,15ª3áâà2,15ª4,16áâà6
7700000000003790017
111401
16ª1,16ª2,16ª3,16ª4,17,17áâà2,19,21/9
7700000000003790018
22,22áâà2,22,24,24,25,26ª1,26ª2
7700000000003790019
26ª2áâà2,26,27,28ª1,28ª2,28ª3,29
7700000000003790020
29áâà4,29,29áâà1,30ª1,30ª2,30ª2áâà1
7700000000003790021
31,31,31áâà2,32ª1,32ª2,32ª3,32ª3áâà7
7700000000003790022
32ª3áâà11,33,33,34,35,35áâà2,35áâà3
7700000000003790023
35áâà6,36,36áâà1,37ª1,37ª2,39,41ª1
7700000000003790024
41ª1áâà2,41ª2,41ª2áâà8
7700000000003790025
1,1,2,3,3áâà,4,4áâà,4,5,5,6,6,7
7700000000003800001
111622
45263573000
7,7áâà,8,9,10,10áâà,10áâà1,11,12
7700000000003800002
13,14,15,15áâà1,15áâà2,15áâà3
7700000000003800003
15áâà4,15áâà5,15áâà6,15áâà7
7700000000003800004
15áâà8,15,15áâà1,15áâà2,15áâà3
7700000000003800005
15áâà5,15áâà6,15áâà7,15áâà8
7700000000003800006
15áâà9,15áâà10,16,16,18,18
7700000000003800007
18áâà2,19,20,21
7700000000003800008
3,3áâà2,5ª1,5ª2,7áâà4,7ª1,7ª2,7ª3,7
7700000000003810001
111396
10,10áâà1,12áâà1,12áâà2,16,16,16áâà2
7700000000003810002
18,18,18áâà1,18,20,20áâà2
7700000000003810003
1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,3ª1
7700000000003820001
111524
3ª2,4áâà1,4áâà2,4áâà5,4áâà13,4áâà14,5
7700000000003820002
7,7,9,9áâà4,9áâà5,11,13
7700000000003820003
1,3,5,5,7/2,9,9,11,11,12,13,13
7700000000003830001
111621
14áâà1,15,15,16ª1,16ª2,16ª2áâà1
7700000000003830004
16ª2áâà2,16,17,18áâà1,18áâà2,18áâà3
7700000000003830005
18áâà4,18áâà5,18áâà6,18áâà7,18áâà8
7700000000003830006
18áâà11,18ª1,18áâà1,18áâà2,18áâà3
7700000000003830007
18áâà4,18áâà5,18áâà6,18áâà7
7700000000003830008
18áâà8,18áâà9,18áâà10,18áâà11
7700000000003830009
18áâà12,18,18,18áâà2,18áâà3
7700000000003830010
18áâà4,18áâà5,18áâà7,18áâà8
7700000000003830011
18áâà1,18áâà2,18áâà3,18áâà4
7700000000003830012
18áâà5,18áâà6,18áâà7,18áâà8
7700000000003830013
18áâà1,18áâà1,19,20ª1,20ª2,21,22
7700000000003830014
22áâà4,24,24áâà,24,26,26,26,28,28
7700000000003830015
28,30,30,30áâà1,32,34,34,34,34
7700000000003830016
1áâà7,1áâà8,8,23,23,27,27áâà1
7700000000003830017
1áâà1,1áâà2,1,1,1áâà1,1áâà1
7700000000003830002
1áâà2,1áâà3,1áâà4,1áâà5,1áâà6
7700000000003830003
27áâà1,27áâà2,27áâà3,27áâà4,27áâà5
7700000000003830018
27áâà6,27áâà9,27áâà12,27áâà13,27áâà14
7700000000003830019
34,34
7700000000003830020
27áâà16,27áâà17,29,29áâà1,29áâà2
7700000000003830021
29áâà3,29áâà5,29áâà6,29áâà7,29áâà9
7700000000003830022
29áâà10,29áâà20,35,36,36áâà2,38,40
7700000000003830023
41,42,43,44,45,47,48,48áâà1,49,50
7700000000003830024
51áâà1,52,53,54,55,56,57,58,59,60
7700000000003830025
61_63áâà1,61_63áâà2,62,64,65,65,65
7700000000003830026
67,69,70,71,72,73,74,76,78,79,80,80
7700000000003830027
80,81,82,83,84,85,86,87,88,89,90áâà1
7700000000003830028
90áâà2,91,92,93,94,95,96,97,97áâà1
7700000000003830029
97áâà2,98,100,101,102áâà1,102áâà2,104
7700000000003830030
105,106,106áâà1,108,109,109áâà1,111
7700000000003830031
112,113,114,115,116,118,119,120,121
7700000000003830032
130áâà2,131,132,133,133áâà1,135áâà
7700000000003830034
135áâà,135áâà,135,135áâà2
7700000000003830035
135áâà3,135áâà4,136,137,138,139áâà1
7700000000003830036
139áâà2,139áâà3,139áâà5,139áâà6
7700000000003830037
139áâà7,139áâà10,139áâà1,140,142,146
7700000000003830038
148,150,152,154,156,158áâà1,160
7700000000003830039
160áâà1,160áâà2,160áâà3,160áâà4
7700000000003830040
160áâà5,160áâà6,160áâà7,160áâà8
7700000000003830041
1/45,3,4,5,5áâà2,6,7,8/16,9
7700000000003840001
15ª1,15ª2,15ª3,15ª3áâà2,17ª1,17ª2,19ª1
7700000000003840002
19ª2,19ª3,21ª1,21ª1áâà2,21ª1áâà3,21ª2
7700000000003840003
23ª1,23ª2,23ª3,23ª3áâà2,25áâà3,25ª1
7700000000003840004
25ª2,27ª1,27ª2,27ª3,27
7700000000003840005
1áâà4,1/1,1/1ª1,1/1ª2,11,11áâà1,11ª1
7700000000003850001
7719
11ª1áâà2,14,14áâà1,15/2,15,16,16áâà1
7700000000003850002
16áâà22,16áâà23,16áâà34,16áâà42
7700000000003850003
16áâà47,16áâà49,16áâà50,16áâà51
7700000000003850004
16ª182,16,17,17áâà1,17ª1,17áâà1
7700000000003850005
17áâà3,17áâà11,17áâà12,17áâà13
7700000000003850006
17áâà14,17,17áâà2,18,18áâà5,18áâà7
7700000000003850007
18áâà8,18,18áâà2,18,18áâà1,19
7700000000003850008
20áâà5,20áâà6,20áâà9,20ª1,20ª2,20ª3
7700000000003850009
20ª4,20,21,21áâà3,21áâà4,21áâà5
7700000000003850010
21áâà6,21áâà8,22ª1,22ª2,22ª3,23,23áâà4
7700000000003850011
16áâà56,16áâà63,16áâà69,16áâà80
7700000000003850012
16áâà95,16áâà100,16áâà123,16áâà179
7700000000003850013
9,9áâà1,21áâà2,30/8,32,32
7700000000003850014
25,25,25áâà1,25áâà3,25áâà4,25áâà5
7700000000003850015
25áâà9,27,27áâà6,27ª2,27ª3,27ª4,27ª5
7700000000003850016
27,27áâà1,29/1,29,31,31áâà2,31áâà3
7700000000003850017
31áâà7,31áâà8,31áâà9,31áâà11,31áâà12
7700000000003850018
31áâà13,33,33áâà1,33,33áâà2,33áâà3
7700000000003850019
33áâà4,33áâà5,33áâà10,33áâà12,35
7700000000003850020
35áâà2,35áâà3,35áâà4,35áâà5,37áâà4
7700000000003850021
37ª1,37ª2,37ª3,37,37,39ª1,39ª1áâà1
7700000000003850022
39ª2,39ª3,41/17
7700000000003850023
43,43áâà2,43áâà6,45,45áâà1,47,47
7700000000003850024
47áâà6,47,49,51,51áâà4,51áâà5
7700000000003850025
51áâà12,51áâà15,51áâà16,51áâà17
7700000000003850026
51áâà18,51áâà20,51áâà21,51áâà22
7700000000003850027
51áâà23,51áâà26,51áâà27,51,53,53áâà2
7700000000003850028
1áâà3,1ª1,1ª2,1áâà1,1áâà2,1áâà3,1
7700000000003860001
2,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6,2áâà10
7700000000003860002
2áâà11,2áâà12,2áâà13,2áâà14,2áâà15,3ª1
7700000000003860003
3ª2,5ª1,5ª2,6,6áâà1,6áâà2,6áâà3,6áâà4
7700000000003860005
6áâà5,6áâà6,6áâà7,6áâà8,6áâà9,6áâà10
7700000000003860006
6áâà11,6áâà12,6áâà19,6áâà1,6áâà2
7700000000003860007
6áâà3,6áâà4,6áâà6,6áâà9,6áâà16
7700000000003860008
7ª1,7ª2,9,11,11áâà2,11áâà6,11ª1,13
7700000000003860009
14áâà2,15/1
7700000000003860010
8áâà4,8áâà5,8áâà9,8áâà10,8áâà11,8áâà1
7700000000003860011
8áâà2,12,12áâà2,12áâà3,12áâà4,12áâà5
7700000000003860012
12áâà6,12áâà7,14,14áâà1,14áâà4,14áâà8
7700000000003860013
14áâà10,14áâà11,14áâà13,16,16áâà1
7700000000003860014
16áâà5,16áâà6,16,16áâà1,17/2,19,21
7700000000003860015
21áâà2,23,23,25,27,27áâà1,27áâà3
7700000000003860016
27áâà6,27áâà11,27áâà12,27ª1,27ª2,27ª3
7700000000003860017
27ª4,27ª5,27ª5,27ª6,27ª8,27ª9,27ª10
7700000000003860018
27ª11,27ª11,27ª12,27ª13,27ª13,27ª14
7700000000003860019
27ª24,27ª25,27ª27,27ª28,27ª29,27ª30
7700000000003860020
27ª31,27ª33,27ª34,27ª35,27ª38,27ª39
7700000000003860021
27ª40,29,29áâà6,29áâà7,29áâà1,29áâà2
7700000000003860022
29áâà3
7700000000003860023
1,2ª1,2ª4,3,4ª1,4ª2,4ª3,4ª4,4,5,6,7,8
7700000000003870001
8,8,8,9,10,10ª1,11,11,12,13,14
7700000000003870002
14áâà,15,15áâà2,16,17,19,21,23,25
7700000000003870003
16,20,20,20áâà2,20,22ª1,22ª2,22
7700000000003880001
111395
45263555000
24áâà1,24áâà2,24ª1,24ª1áâà1,24,24
7700000000003880002
24,26ª1,26ª2,26ª2áâà2,26ª2áâà3,28áâà3
7700000000003880003
28/21ª1,28/21ª2
7700000000003880004
1ª1,1ª2,1ª3,2,2áâà1,2áâà2,2áâà3,2
7700000000003880005
111402
2áâà2,3,3áâà1,3áâà2,3áâà4,3ª1,3,3
7700000000003880006
4ª1,4ª1áâà1,4ª1áâà2,4ª1áâà8,4ª1áâà15
7700000000003880007
4ª2,4ª3,4,4,5ª1,5ª2,5ª3,5ª4,5ª5,6ª1
7700000000003880008
6ª2,6ª3,6ª4,6ª4áâà2,6ª5,6ª5áâà2,6/8,6
7700000000003880009
8ª1,8ª2,10,10áâà2,12ª1,12ª1áâà2
7700000000003880010
12ª1áâà3,12ª2,12ª3,12,12,12áâà1,12
7700000000003880011
12,12áâà1,12,14ª1,14ª2,14ª2áâà2
7700000000003880012
16,18,18áâà2,18,18,18,18áâà1
7700000000003880013
111538
18áâà2,18áâà3,25áâà1,25áâà2,25/2,25
7700000000003880014
27ª1,27ª2,27ª3,27ª4,27ª4áâà3,27ª4áâà4
7700000000003880015
27ª5,27ª5áâà1,27ª5áâà2,27ª5áâà3
7700000000003880016
27ª5áâà5,27,27áâà2,27áâà3,29,29
7700000000003880017
29,29áâà1,29,29,31,31áâà2,31ª2,31
7700000000003880018
33,35/26,37,37áâà3,39,39,39,39áâà1
7700000000003880019
39áâà2,39,39,41ª1,41ª2,41ª3
7700000000003880020
41ª3áâà2,41ª3áâà3,41,41,43
7700000000003880021
9ª1,9ª1áâà1,9ª2,9ª2áâà2,9ª2áâà3
7700000000003880022
111539
9ª2áâà4,11ª1,11ª2,11,11áâà2,13
7700000000003880023
13áâà2,13,15ª1,15ª2,15ª3,17,17,17
7700000000003880024
17áâà1,17,19,21áâà2,21áâà3,21/26,23
7700000000003880025
7700000000003880026
23áâà7,23áâà8,23áâà9,23áâà14,23áâà20
7700000000003880027
23áâà21,23áâà22,23áâà23
7700000000003880028
2,3,3áâà2,3ª1,3ª2,3ª3,4,4,5,5áâà2
7700000000003890001
5áâà3,5áâà5,6,6,7,8,9,9,10,10
7700000000003890002
10áâà2,10áâà3,10,10áâà2,10áâà3
7700000000003890003
10,10,10áâà1,10áâà2,10áâà3,11
7700000000003890004
12áâà1,12áâà2,12áâà3,12áâà5,12áâà8
7700000000003890005
12ª1,12ª2,12,12áâà1,12áâà3,12áâà4
7700000000003890006
12áâà5,12áâà19,12,12,13,13áâà4,14
7700000000003890007
14áâà8,14,16,18ª1,18ª2,18ª3,18ª4,18ª5
7700000000003890008
18,18áâà2,18áâà3,18áâà4,18áâà5
7700000000003890009
18áâà7,20,20
7700000000003890010
22ª1,22ª2,22áâà1,22áâà2,24ª1,24ª2
7700000000003890011
24ª2áâà2,26ª1,26ª2,26,26,28,30ª6
7700000000003890012
34ª1,34ª2,34ª3,39/12,41,41áâà2,43,47
7700000000003890013
15ª1,15ª2,15ª3,15,15áâà1,17,17,19/1
7700000000003890014
21,23ª1,23ª2,23ª3,25ª1,25ª2,25ª3
7700000000003890015
25ª3áâà3,27ª1,27ª2,29ª1,29ª2,31,33áâà3
7700000000003890016
33ª1,33ª2,35ª1,35ª1áâà3,35ª2,37/15
7700000000003890017
3ª1,3ª2,3ª3,3ª3áâà3,3,3áâà1,4,4áâà2
7700000000003900001
4,5,5,6,7,8áâà4,8ª1,8ª1áâà3,8ª2,10
7700000000003900002
10,10
7700000000003900003
23,25ª1,25ª2,25ª3,25ª4,25ª5,25ª5áâà4
7700000000003900004
25ª5áâà8,27,27áâà2,29,31/33,32/31
7700000000003900005
17,19,21
7700000000003900006
111399
9ª1,9ª2,9ª3,9ª3áâà3,9ª4,9ª4áâà2,9,11
7700000000003900007
12ª1,12ª2,12,14,16,18,20,24,24áâà2
7700000000003900008
24áâà3,24,26ª1,26ª1áâà2,26ª2,26ª2áâà3
7700000000003900009
26ª2áâà4,26,28,30,30
7700000000003900010
7/5,7/5áâà2,9,9áâà2,9áâà3,11
7700000000003910001
125167
7714
45277553000
13,15,15,17
7700000000003910002
125319
7700000000003910003
127083
45277586000
7700000000003910004
7700000000003910005
10áâà15,10áâà28,12
7700000000003910006
1áâà1,1áâà2,1áâà8,1áâà9,1áâà10,1áâà11
7700000000003910008
1áâà14,1áâà18,1áâà19,1áâà20,1áâà21
7700000000003910010
1áâà23,1áâà24,18áâà1
7700000000003910011
2/10áâà4,2/10áâà7,2/10ª1,2/10ª2,2/10ª3
7700000000003910013
4,4áâà2,6,6áâà1,6áâà2,6áâà3,6áâà1
7700000000003910014
8áâà3,8ª1,8ª2
7700000000003910015
14,14áâà1,14áâà2,14áâà3,14áâà4,14áâà5
7700000000003910016
127092
14áâà6,14áâà7,14áâà8
7700000000003910017
7700000000003910007
127287
7700000000003910009
1,3,3,4,5,5áâà2,6,6áâà1,6áâà2
7700000000003920001
3,5,5áâà2,8áâà3,8ª1,8ª1áâà1,8ª2
7700000000003930001
111672
45263579000
8ª2áâà1,8ª2áâà3,8ª3,8,9ª1,9ª1áâà1,9ª2
7700000000003930002
9ª3,9ª3áâà2,9,9,10,10áâà2,10,10,11
7700000000003930003
12/17ª1,12/17ª2,12/17ª2áâà2,13/19ª1
7700000000003930004
13/19ª2
7700000000003930005
1ª1,1ª2,1,1,1áâà3,3ª1,3ª2,3ª3
7700000000003940001
3ª3áâà1,3ª3áâà3,3,5ª1,5ª1áâà2,5ª2,5ª3
7700000000003940002
5ª3áâà1,5ª4,5ª5,5ª5áâà1,5ª5áâà2,5,7
7700000000003940003
1áâà1,1áâà2,1áâà3,1áâà4,1,1áâà1
7700000000003950001
1áâà3,2,2áâà1,2ª1,3,3áâà3,3áâà5,3áâà6
7700000000003950002
3áâà7,3áâà9,3áâà10,3áâà11,3áâà14
7700000000003950003
3áâà16,3áâà17,3áâà20,3áâà33,3áâà34
7700000000003950004
3áâà35,3áâà36,3áâà37,3,3áâà1,3
7700000000003950005
4áâà3,4ª1,4ª2,5/12áâà1,5/12áâà2
7700000000003950006
5/12áâà3,5/12áâà4,5/12áâà5,5/12áâà14
7700000000003950007
6ª1,6ª1áâà2,6ª2,6ª3,6ª3áâà1,7,7áâà2,7
7700000000003950008
8,8áâà2,8áâà1,8áâà2,8,9,10,10ª19
7700000000003950009
10,11,11,11áâà2,11áâà5,13,14
7700000000003950010
30,30áâà1,30áâà2,30áâà4,32,34
7700000000003950011
40ª1,40ª2,40ª2áâà2,42,42áâà2,42
7700000000003950012
42áâà2,44,44áâà2,46,48ª1,48ª2,48ª3
7700000000003950013
48,50,50áâà1,52ª1,52ª2,54,54,56
7700000000003950014
56áâà3,60/35,60,60,62áâà3,62áâà4
7700000000003950015
62áâà5,62ª1,62ª2,62ª3,64,64,64áâà3
7700000000003950016
66áâà3,66áâà4,66ª1,66ª2,66,68áâà3
7700000000003950017
68ª1,68ª2,70ª1,70ª2,74,74áâà3,74áâà4
7700000000003950018
74áâà5,74áâà6,74,76
7700000000003950019
20,22,22áâà1,22áâà2,24,24áâà2,24áâà3
7700000000003950020
24,26,28áâà1
7700000000003950021
27áâà6,27ª1,27ª2,27ª3,27,29ª1,29ª2
7700000000003950022
29ª3,35áâà7,35ª1,35ª2,35ª3,37,39áâà5
7700000000003950023
39ª1,39ª2,39ª3,39ª4,47,47,49
7700000000003950024
61,63,63áâà5,63áâà6,65,67ª1,67ª2,69ª1
7700000000003950025
69ª2,71ª1,71ª2,73
7700000000003950026
53áâà7,53ª1,53ª2,53ª2áâà1,55,57,59
7700000000003950027
59áâà1,59ª1,59ª1áâà2,59
7700000000003950028
17,19,19,19áâà2,23/43,25ª1,25ª2,25ª3
7700000000003950029
25ª3áâà2
7700000000003950030
89ª1,89ª2,91,93,95,95,97,97áâà6,99
7700000000003950031
111558
99,101,101,103,105,105áâà1
7700000000003950032
75,75áâà2,75áâà3,75,75áâà2,77ª1,77ª2
7700000000003950033
79,81,83,83ª2,83ª3,83ª4,83ª4áâà2
7700000000003950034
83ª4áâà3,83ª4áâà5,83,85,85áâà2,87ª1
7700000000003950035
1,2áâà1,2áâà2,3,3áâà3,4,5,6,7,8,8,9
7700000000003960001
111625
9áâà,10,10,11,12,15,15,16,17,17áâà1
7700000000003960002
19,20,21,21áâà1,22,24,24,25,26,27,28
7700000000003960003
29,30,31,33,34,35,36,37,40,41,42,44
7700000000003960004
45áâà1,45áâà2,45,46,46,48,50,50,52
7700000000003960005
52,52,52,54,56,58_58áâà1
7700000000003960006
58_58áâà2,60,62,64,66,68,70,70áâà1,70
7700000000003960007
ª,1,1,1áâà6,1áâà7,1áâà15,2,3,3,4
7700000000003970001
5,5,6,7,8,10,11,12_12áâà,12_12áâà
7700000000003970002
12_12áâà1,13áâà1,15áâà2,17,17,18
7700000000003970003
18áâà1,19,20,21,22ª1,22ª2,22ª2áâà1
7700000000003970004
22ª2áâà2,23,24,24ª1,24ª2,24ª3,24ª4,25
7700000000003970005
26,27,28,29áâà1,29áâà2,30,30,30
7700000000003970006
30áâà1,30áâà2,31áâà1,31áâà2,31áâà3
7700000000003970007
1/1,2,3,3,4,4,4,5,5,5áâà1,5áâà2
7700000000003980001
5áâà3,6,6áâà1,6,6,7,7,7,7áâà1
7700000000003980002
7áâà2,7áâà3,8,8áâà,8,9,9áâà,9áâà
7700000000003980003
10,11,12,12,13,13,14,15,15,16,16
7700000000003980004
17,18,20ª1,20ª1áâà1,20ª2,20ª2áâà1,20ª3
7700000000003980005
21áâà1,21áâà2,21,21áâà1,21áâà2
7700000000003980006
21áâà3,21,21áâà1,22,23,24,24áâà1,25
7700000000003980007
26,27,27,28,28,29,29,29,30,30,31
7700000000003980008
31,32,32áâà,33,34,34,34,34áâà1
7700000000003980009
34áâà2,35,35,35áâà1,35,35
7700000000003980010
1áâà1,1áâà2,2ª1,2ª2,2ª3,2ª3áâà2,2ª4
7700000000003990001
2ª4áâà1,2ª4áâà2,2ª5,2,2áâà1,2áâà2
7700000000003990002
2áâà3,2áâà4,2áâà5,2áâà6,3,4,4,4
7700000000003990003
4áâà1,5,6áâà5,6ª1,6ª2,6ª3,6,6,7
7700000000003990004
7áâà2,7áâà3,7áâà4,7áâà6,7,7ª1,7áâà1
7700000000003990005
7áâà2,8ª1,8ª2,8ª3,8,8,9,9áâà2,9áâà7
7700000000003990006
10,10áâà2,10,11,11áâà2,11áâà3,11áâà4
7700000000003990007
11áâà5,11,12,13,13áâà1,13áâà2,13áâà4
7700000000003990008
13áâà5,13áâà6,13áâà7,13áâà8,13áâà9
7700000000003990009
13áâà10,15,16,16áâà2,16áâà3,16áâà1
7700000000003990010
18,18áâà2,18áâà3,20
7700000000003990011
3,3áâà1,3áâà2,3áâà3,3áâà4,3,4ª1,4ª2
7700000000004000001
4,4,5áâà1,6ª1,7,7,7áâà1,7áâà2
7700000000004000002
7áâà3,7áâà5,7áâà6,7áâà7,8,8áâà3
7700000000004000003
8áâà4,8ª1,9,9áâà1,9áâà2,9áâà4,9áâà5
7700000000004000004
7700000000004000005
9áâà12,9áâà13,9áâà14,9áâà15,9áâà16
7700000000004000006
9áâà17,9áâà18,9áâà19,9áâà20,9áâà21
7700000000004000007
9áâà22,9áâà23,10,10áâà2,10,11,11áâà2
7700000000004000008
11,11áâà1,11áâà2,11áâà3,11áâà4
7700000000004000009
11áâà5,12,13,13áâà2,13áâà3,13
7700000000004000010
13áâà1,14ª1,14ª2,14ª2áâà2,14ª3,14ª4
7700000000004000011
16ª1,16ª2,16ª3,16ª3áâà2,16ª3áâà3,16ª4
7700000000004000012
17,17áâà1,17áâà2,18ª1,18ª2,18ª2áâà3
7700000000004000013
18ª2áâà4,18ª3,20áâà4,20/17ª1,20/17ª2
7700000000004000014
21áâà1,21áâà2,21áâà3,21áâà4
7700000000004000015
21áâà5,21áâà6,21áâà7,21áâà8
7700000000004000016
21áâà9,21áâà10,21áâà11,21áâà12
7700000000004000017
21áâà13,21áâà14,21áâà15,22,24ª1
7700000000004000018
24ª2,24ª3,24,26ª1,26ª2,26ª2áâà2,26
7700000000004000019
1,2,3,4,5,6,7,8,9,10,11,12,13,14,15,16
7700000000004010001
17,19,20,21,22,23,24,25,26,27,28,29,30
7700000000004010002
31,32,33,34,35,36,37,38,39,40,41
7700000000004010003
43_45áâà1,43_45áâà2,44,47,48,49,50,51
7700000000004010004
52,53,54,55,56,57,58,59,60,60,61,62
7700000000004010005
62,63,65,66,67,68,69,70,71,71,72
7700000000004010006
73áâà1,74áâà,74áâà1,75,75,76
7700000000004010007
76áâà1,77,78,79,80áâà,80áâà1,81,82
7700000000004010008
83,84,84áâà1,85,86,87,88,89,90,91,92
7700000000004010009
93,94,95áâà1,95áâà2,96,97,98,98áâà,99
7700000000004010010
100,100,101,102,103,104,104áâà1,105
7700000000004010011
105,106,107,108,109,110,111,112,113
7700000000004010012
114,115,116,117,118,119,120,120,121
7700000000004010013
121,122,123,125,127,129,129,131,133
7700000000004010014
133,135,137,141,141,143
7700000000004010015
7700000000004020001
17,18,19,20,21,22,23,24,25,26,27,29,30
7700000000004020002
30,32,33,34,35,36,38áâà,38,38áâà1
7700000000004020003
38áâà3,38áâà20,38áâà21,38áâà22
7700000000004020004
38áâà23,38áâà28,38áâà30,38áâà31
7700000000004020005
38áâà32,38áâà33,38áâà34,38áâà35
7700000000004020006
38áâà36,38áâà37,38áâà38,38áâà39
7700000000004020007
38áâà40,38áâà42,38áâà43,38áâà44
7700000000004020008
38áâà46,38áâà48,38áâà51,38áâà52
7700000000004020009
38áâà53,38áâà54,38áâà55,38,38áâà1
7700000000004020010
38áâà2,38áâà3,38áâà4,38ª1,38ª2
7700000000004020011
38ª3,40,42,44
7700000000004020012
áâà1,áâà2,áâà3,áâà12,áâà13,1,4áâà1
7700000000004030001
16,18,20,22ª1,22ª2,24,26,28,28áâà1
7700000000004040001
28áâà3,28áâà4,30,30áâà1,32,34,36,38
7700000000004040002
40ª1,40ª1áâà1,40ª2,40ª3,40,40áâà2
7700000000004040004
1,1,3,3áâà,3áâà1,3áâà1,3,4,4áâà1,5
7700000000004040005
5ª2,5,6,7,7,8,8,9,10,11,12,13,14,15
7700000000004040006
40,40,40
7700000000004040007
28áâà2
7700000000004040003
1ª1,1ª1áâà1,1ª2,1ª2áâà3,1,1,1,2,3ª1
7700000000004050001
3ª1áâà2,3ª2,3ª3,3ª4,3ª5,3ª5áâà1,3ª6
7700000000004050003
3ª6áâà2,3ª7,3ª7áâà1,3,4áâà1,5,5áâà2
7700000000004050004
6,6áâà2,6áâà2,6áâà3,6áâà4,7,7,7ª1
7700000000004050005
13,15ª1,15ª1áâà3,15ª2,15ª2áâà4,17,18
7700000000004050006
19
7700000000004050002
20,20áâà1,20áâà2,20áâà3,20áâà4,20áâà5
7700000000004050007
20áâà6,20áâà7,20áâà8,20áâà9,20áâà25
7700000000004050008
20áâà27
7700000000004050009
18,18,18,18áâà1,18áâà1,18áâà2
7700000000004060001
18áâà3,18,18áâà1,18áâà2,19ª1,19ª2
7700000000004060002
20,20,21ª1,21ª2,21ª3,21ª3áâà3,22áâà1
7700000000004060003
22áâà8,22,22,23áâà5,23ª1,23ª2
7700000000004060004
23ª2áâà4,23ª3,23ª4,23ª5,25ª1,25ª1áâà2
7700000000004060005
25ª2,27ª1,27ª2,29ª1,29ª1áâà2,29ª2
7700000000004060006
29ª2áâà2,31ª1,31ª2,31,33,35ª1,35ª2
7700000000004060007
35ª2áâà1,35ª2áâà2,37/60
7700000000004060008
26,26áâà1,26áâà5,26áâà7,26áâà2
7700000000004060009
26áâà3,41,43áâà4,43ª1,43ª2,45,47
7700000000004060010
12,12áâà6,12áâà7,12áâà8,12áâà14
7700000000004060011
12áâà17,12áâà20,12áâà31,12áâà32
7700000000004060012
12áâà33,12áâà34,14,14áâà2,16,16áâà1
7700000000004060013
16,16áâà3,17,17áâà1,17áâà2,17ª1
7700000000004060014
1,1áâà2,1áâà3,1,1áâà2,1áâà3,1áâà4
7700000000004060015
7700000000004060016
1áâà10,1áâà11,1áâà12,1áâà14,1,1
7700000000004060017
2áâà1,2,4,4,5,5áâà1,8,8áâà3,8áâà5
7700000000004060018
8áâà6,8,9,9áâà1
7700000000004060019
8ª1,8ª2,8ª2áâà2,8ª2áâà3,10
7700000000004070001
1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,2
7700000000004080001
2áâà1,2áâà2,4,4áâà1,8áâà1,8áâà2,8áâà3
7700000000004080002
8áâà4
7700000000004080003
1,2,3,3áâà2,4ª1,4ª2,5,6,7,7áâà2,7áâà3
7700000000004090001
7áâà4,8,8áâà2,8ª1,8ª2,8ª3,9,9áâà2,9
7700000000004090002
9áâà1,10,10áâà1,10áâà2,12,14ª1,14ª2
7700000000004090003
16áâà3,16áâà4,16ª1,16ª2,18áâà3,18ª1,18ª2
7700000000004090004
1,1,4,5,6,7,9,12,13,15,16,17,18,19,20
7700000000004100001
21,22,23,24,25,26,28,29,30,31,32áâà1
7700000000004100002
32áâà2,32áâà3,32áâà4,32áâà5,32áâà6
7700000000004100003
32áâà7,33,35,36,37,38,39,40,42,43,44
7700000000004100004
1áâà1,1áâà2,1ª1,1ª2,2,2áâà1,2áâà2
7700000000004110001
2áâà4,2áâà6,3,4,5,5,6,7,7áâà1,8,9
7700000000004110002
10,11,11,12,13,13,13,14,14áâà1,15
7700000000004110003
15,15,16,18,19,20,20áâà2,21,22,23
7700000000004110004
23áâà1,26,26áâà1,28,29,30,32,33,35
7700000000004110005
16/36,18,19,20,22áâà3,22áâà4,22áâà12
7700000000004120001
22ª1,22ª2,23,24,24áâà3,25,25,27,29,30
7700000000004120003
31,31,32/15,33,34,34áâà2,34áâà7,35
7700000000004120004
35áâà2,36,36áâà2,36áâà3,36áâà4,36áâà5
7700000000004120005
36áâà6,36áâà7,36áâà8,37áâà1,38,38áâà2
7700000000004120006
38áâà3,38áâà4,38áâà5,38áâà6,38áâà12
7700000000004120007
38áâà13,38áâà14,38áâà15,38áâà17,39áâà2
7700000000004120008
39ª1,39ª2,41,41áâà2
7700000000004120009
38áâà11,38áâà16,38áâà18
7700000000004120002
1/58,3,3,4,4áâà1,4áâà2,5,6ª1,6ª2,6ª3
7700000000004120010
7,8ª1,8ª2,8ª3,8ª3áâà1,8ª4,9/13,11áâà1
7700000000004120011
11/12,12,13,13áâà3,14áâà1,14/57,15
7700000000004120012
2/6,2/6áâà2,3,4,4áâà2,4áâà3,4áâà4,5
7700000000004130001
6ª1,6ª2,7,7áâà2,8,9,9,11,11,13,13
7700000000004130002
15,15áâà2,17/1ª1,17/1ª2
7700000000004130003
41áâà1,41áâà2,41áâà6,41áâà7
7700000000004140001
62ª1,62ª1áâà1
7700000000004140002
24/15,26ª1,26ª2,26ª3,28,28áâà2,28áâà3
7700000000004140003
28,30,32ª1,32ª2,32ª3,33,37,37áâà2
7700000000004140004
37áâà3,37áâà4,37,37áâà2,37,38,40,42
7700000000004140005
42áâà2,44ª1,44ª1áâà6,44ª2,46ª1,46ª2
7700000000004140006
46ª3,48,48ª1,48ª2,48ª3,48ª4,48ª5,50,52
7700000000004140007
54,56,60ª1,60ª2,60,60áâà1,60áâà2,62
7700000000004140008
2,2áâà1,3,3áâà1,3áâà5,4,5,6,7/18,8/20
7700000000004140009
10/23,11,12ª1,12ª2,12ª3,13ª1,13ª2,14
7700000000004140010
14áâà2,15,16,16,17,17,18,18áâà2,19
7700000000004140011
20ª1,20ª2,20ª3,22/22,23/13,23,25,27
7700000000004140012
27áâà6,27,29,29
7700000000004140013
1,2,3,4,5ª,5áâà1,5áâà2,5ª1,6,7,8,9
7700000000004150001
11,11áâà1,12áâà1,12áâà2,12ª1,12ª2,13
7700000000004150002
14,15,16,17,18,19,19,20,21,21,22
7700000000004150003
23áâà1,23áâà2,23ª1,23ª1,23,24,24áâà1
7700000000004150004
25,25áâà1,26,26,28,29,30,31,32,33áâà1
7700000000004150005
33áâà2,33ª1,33ª2,34,35,36ª,36áâà1
7700000000004150006
36áâà2,36ª1,37,39,41ª,41ª,41áâà1
7700000000004150007
41áâà2,42,43,44áâà1,44áâà2,44ª1,44ª2
7700000000004150008
45,46,46áâà1,46,47,47,48,49,52áâà1
7700000000004150009
52áâà2,52áâà3,53,53,54,55,57,58,60
7700000000004150010
2ª1,2ª2,4,6,6,6áâà2,6áâà3,6áâà4
7700000000004160001
6áâà5,8ª1,8ª2,8ª2áâà2,10áâà3,10ª1
7700000000004160002
10ª1áâà2,10ª2,10ª3,10ª4,10,10áâà1
7700000000004160003
10áâà2,10ª2,10,12ª1,12ª2,12ª3
7700000000004160004
12ª3áâà2,12,14,14áâà1,16ª1,16ª2,16ª3
7700000000004160005
16,16,18ª1,18ª2,20,20,22áâà4,22áâà5
7700000000004160006
22áâà6,22áâà7,22ª1,22ª2,22ª3
7700000000004160007
1áâà1,3ª1,3ª2,3ª2áâà2,3ª3,3,3,5
7700000000004160008
5áâà2,5áâà3,9,9áâà2,11ª1,11ª1áâà2
7700000000004160009
11ª2,13,13,15ª1,15ª2,15ª2áâà1,15,19
7700000000004160010
19áâà1,28ª1,28ª1áâà2,28ª2,28ª3,28ª4
7700000000004160011
30,30,30,32,32áâà2,32áâà3,32áâà4
7700000000004160012
7700000000004160013
34áâà6,34áâà7,34áâà7,34áâà8,34áâà9
7700000000004160014
34áâà11,34áâà12,34áâà13,34,34áâà1
7700000000004160015
34,34áâà1
7700000000004160016
1áâà6,1ª1,1ª1áâà5,1ª2,1ª3,1ª4,1ª5,1
7700000000004170001
111555
1,1áâà1,1,1,1áâà2,1áâà3,2áâà3
7700000000004170003
2áâà4,2ª1,2ª2,3ª1,3ª1áâà2,3ª2,3,3,3
7700000000004170004
3áâà2,4áâà4,4áâà5,4ª1,4ª2,4ª3,4ª4,4
7700000000004170005
4áâà1,4,5,5áâà2,6ª1,6ª1áâà2,6ª2,6ª3
7700000000004170006
6ª4,6,7,7áâà1,7ª2áâà2,7,8áâà5,8ª1
7700000000004170007
8ª2,8ª3,8ª4,8,9ª1,9ª2,9,9,9áâà1
7700000000004170008
10áâà4,10ª1,10ª1áâà1,10ª2,10ª3
7700000000004170009
10ª3áâà1,10,10áâà5,10,10,10
7700000000004170010
10áâà1,11ª1,11ª2,11ª2áâà2,11ª3,11ª4
7700000000004170011
11ª5,11ª6,11ª6áâà2,11ª6áâà3,13ª1,13ª2
7700000000004170012
7700000000004170002
12,14áâà5,14áâà6,14ª1,14ª2,14ª3,14ª4
7700000000004170013
14ª5,14ª6,14,14áâà1,14áâà2,14áâà3
7700000000004170014
15ª1,15ª1áâà2,15ª1áâà3,15ª2,15ª2áâà2
7700000000004170015
15ª2áâà4,15ª3,15ª4,15ª5,15ª5áâà1
7700000000004170016
15ª5áâà2,16ª1,16ª2,16ª3,16ª4,16ª4áâà2
7700000000004170017
17ª1,17ª2,18,19áâà5,19áâà6,19áâà7,19ª1
7700000000004170018
19ª1áâà2,19ª2,19ª3,19ª4,21/34
7700000000004170019
40áâà1,40áâà2,44áâà1,44áâà2
7700000000004180001
1,1,1áâà1,3,3áâà1,4,4áâà1,5,6,7,8,9
7700000000004190001
10,11,12,13,14,15,16,17,18,19,20,21,22
7700000000004190002
23,24,25,26,27,28,29,30,31,32,33,35,37
7700000000004190003
39,41,43,45,47,49,51,53,55,57,59
7700000000004190004
1,1áâà2,3,5,5áâà4,5,7,7áâà2,9,9áâà2
7700000000004200001
9áâà4,9
7700000000004200002
12,14,16,18
7700000000004200003
4,6,6,10
7700000000004200004
1,1áâà3,1áâà4,1áâà5,1áâà6,1áâà7,1áâà8
7700000000004210001
1áâà10,1áâà12,1ª2,1ª3,1ª4,3,3,3áâà2
7700000000004210002
3áâà3,3áâà4,3áâà5,3áâà9,4ª1
7700000000004210003
4ª1áâà1,4ª1áâà4,4ª1áâà5,4ª2,4,6,6
7700000000004210004
6áâà2,6,8ª1,8ª2,8ª3,10ª1,10ª2,10ª3
7700000000004210005
37,37,39,39,39ª1,41,41áâà1,45,47/26
7700000000004210006
49áâà1,49/28,51ª1,51ª1áâà3,51ª1áâà5,52
7700000000004210007
53,54,54áâà1,54áâà2,58
7700000000004210008
12ª1,12ª2,12ª3
7700000000004210009
44áâà2,44áâà3,44/28,44/28áâà6,46,48,50/9
7700000000004210010
19/2,21,23,24áâà3,24ª1,24ª1áâà1,24ª3
7700000000004210011
24ª4,24,25,26,26áâà2,26áâà3,26áâà4
7700000000004210012
26áâà5,26áâà6,26áâà7,26áâà11,28,28áâà1
7700000000004210013
28,28,29ª1,29ª1áâà2,29ª2,29ª3
7700000000004210014
29ª3áâà2,30,30áâà1,30áâà2,31áâà2,31/45
7700000000004210015
5,5,7,9,11áâà1,11/36áâà1,13,13áâà4,15
7700000000004210016
17,20áâà3,20/34ª1,20/34ª2,20/34ª3,22
7700000000004210017
22áâà1,22
7700000000004210018
14ª1,14ª1áâà3,14ª2,14ª3,14,16ª1,16ª2
7700000000004210019
16ª3,18/31
7700000000004210020
14ª1,14ª2,14ª3,14ª4,14ª5,14ª5áâà1,14ª6
7700000000004220001
14ª7,14ª7áâà1,14ª7áâà2,14,14áâà1,14
7700000000004220002
14,20ª1,20ª2,20ª3,20ª4,22,24ª1,24ª2
7700000000004220003
24ª2áâà1,24ª3,24,26,28,32,32áâà1,34
7700000000004220004
34áâà2,35,36,36,36áâà3,37,38ª1
7700000000004220005
38ª1áâà2,38ª2,38ª3,38,39,40,40áâà1
7700000000004220006
40áâà2,40,41,42,42áâà2,42,43,44,44
7700000000004220007
45,46ª1,46ª1áâà1,46ª2,46ª2áâà2,47,48
7700000000004220008
49,49áâà2,51ª1,51ª2,51ª3
7700000000004220009
6ª1,6ª2,6,7,8ª1,8ª2,9ª1,9ª1áâà1,9ª2
7700000000004220010
111673
9ª3,9,9,10ª1,10ª1áâà1,10ª2,10ª2áâà1
7700000000004220011
10ª3,10,11ª1,11ª1áâà2,11ª2,11,12ª1
7700000000004220012
12ª2,12ª3,12ª4,12ª5,12ª6,12,13ª1,13ª2
7700000000004220013
13ª2áâà1,13ª3,13ª4,13,13,15ª1
7700000000004220014
15ª1áâà1,15ª2,15ª3,15ª4,15ª5,15ª7
7700000000004220015
15áâà1,15,15,15áâà2,17ª1,17ª1áâà1
7700000000004220016
17ª2,17ª3,17ª4,17ª5,17ª5áâà1,17ª6,17ª7
7700000000004220017
17,19,19áâà1,19áâà2,21,23,23áâà2,25
7700000000004220018
27,29,29áâà1,31
7700000000004220019
7700000000004230001
2,2áâà1,4,6,6áâà,6ª,6áâà1,6áâà1
7700000000004240001
6ª1,7,7áâà1,8,8áâà1,8áâà2,9,9,10
7700000000004240002
11,12,12,12áâà1,13,13,14,14,14,15
7700000000004240003
16,16,17,18,18áâà1,18áâà2,18,18
7700000000004240004
19,20,21,21áâà2,22,23áâà2,23áâà3
7700000000004240005
23áâà4,23áâà5,23áâà6,23áâà7,23áâà8
7700000000004240006
24áâà1,25,25áâà1,25áâà2,25áâà3,25áâà4
7700000000004240007
25áâà5,25áâà6,25
7700000000004240008
1,3,4,5ª1,5ª2,5ª3,5ª4,6ª1,6ª2,6ª3,7ª1
7700000000004250001
7ª2,7ª3,7ª4,8ª1,8ª2,8ª3,9ª1,9ª2,9ª3
7700000000004250002
9ª4,9ª5,10,10,10áâà2,10áâà3,10áâà4
7700000000004250003
10áâà5,10áâà6,10,11,12ª1,12ª2,13ª1
7700000000004250004
13ª1áâà1,13ª1áâà2,13ª2,13,14,15,15
7700000000004250005
16,16áâà2,17,17,18,20ª1,20ª2,20ª2áâà1
7700000000004250006
20ª3,20,20áâà1,22,24ª1,24ª2,24ª2áâà1
7700000000004250007
24ª2áâà2,26ª1,26ª2,26ª2áâà1,30,30áâà1
7700000000004250008
30áâà2,30áâà3,30áâà4,32,32áâà1,32áâà2
7700000000004250009
32áâà3,32áâà4,32áâà5,32áâà6,32áâà7
7700000000004250010
32áâà8
7700000000004250011
7700000000004270001
3áâà14,3áâà15,3áâà17,3áâà18,3áâà19
7700000000004270003
3áâà20,3áâà21,6,6áâà2,6áâà3,7áâà1
7700000000004270004
7áâà2,7áâà3,7áâà5,7áâà6,7áâà7,8,8áâà2
7700000000004270005
8áâà3,8áâà4,8áâà5,9áâà1,9áâà2,9áâà3
7700000000004270006
7700000000004270007
9áâà10,9áâà11,11
7700000000004270008
7700000000004270002
2,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6,2áâà1
7700000000004280001
2áâà2,2áâà3,5,5áâà2,5áâà3,5áâà4
7700000000004280002
5áâà6,7,7áâà2,7áâà3,7áâà4,7áâà5,7áâà6
7700000000004280003
7áâà7,9,9áâà2,9áâà4,9áâà6,9áâà7,9áâà9
7700000000004280004
9áâà10,9áâà11,9áâà11,9áâà12,9áâà14
7700000000004280005
9áâà30
7700000000004280006
1,1áâà2,1,1áâà1,1áâà2,1áâà3,1áâà4
7700000000004290001
1áâà6,3,3áâà9,3,3áâà1,3,4áâà1
7700000000004290002
4áâà2,4áâà3,4,4áâà2,4áâà3,4áâà4
7700000000004290003
4áâà7,5,5,7,7,8,8áâà1,8áâà2,8áâà3
7700000000004290004
7700000000004290005
44,44,44áâà1,46ª1,46ª2,46ª3,46ª4
7700000000004300001
46ª4áâà3,46ª5,48,50áâà2,50ª1,50ª4,50ª5
7700000000004300002
52áâà2,52,54áâà3,54/54
7700000000004300003
5,7ª1,7ª1áâà2,7ª2,9,13áâà3,13áâà4,13ª1
7700000000004300004
13ª2,13,21,21ª1,23,23áâà2,25,27,29ª1
7700000000004300005
29ª2,31,31,32,32áâà1,32/4ª1,33ª1,33ª2
7700000000004300006
33ª2áâà1,33,33áâà1,34áâà2,34áâà3
7700000000004300007
34áâà4,34ª1,35,35áâà2,35,36áâà5,36ª1
7700000000004300008
36ª2,36ª3,36ª4,37,38áâà7,38ª1,38ª2
7700000000004300009
38ª3,38ª4,39ª1,39ª2,39ª3,39ª3áâà1
7700000000004300010
39áâà1,40ª1,40ª2,40ª3,40ª4,42áâà3
7700000000004300011
42ª1,42ª2,42ª3,42,42áâà2,42,43,44ª1
7700000000004300012
44ª2,45,46,47
7700000000004300013
49/53,51,53,55,56/55,57,57áâà2,57,58
7700000000004300014
59,60ª1,60ª2,61áâà1,61/2áâà1,61/2áâà2
7700000000004300015
62,62áâà2,62áâà3,62,63,63,65,65áâà2
7700000000004300016
65áâà3,65áâà4,65áâà6,65áâà7,65áâà9
7700000000004300017
65áâà10,65áâà11,66,66áâà1,66áâà2
7700000000004300018
66áâà4,66áâà5,66áâà6,66áâà7,66áâà7
7700000000004300019
66áâà7,66áâà8,66áâà9,66áâà10,66áâà11
7700000000004300020
66áâà11,66áâà11,66áâà13,66áâà14
7700000000004300021
66áâà15,66áâà16,66áâà16,66áâà16
7700000000004300022
66áâà17,66áâà17,66áâà17,66áâà18
7700000000004300023
66áâà19,66áâà19,66áâà20,66áâà21
7700000000004300024
66áâà22,66áâà23,66áâà24,66áâà25
7700000000004300025
66áâà25,66áâà26,66áâà27,66áâà28
7700000000004300026
66áâà28,66áâà29,66áâà29,66áâà29
7700000000004300027
66áâà30,66áâà31,66áâà31,66áâà32
7700000000004300028
66áâà32,66áâà33,66áâà33,66áâà34
7700000000004300029
66áâà35,66áâà1,66áâà2,66áâà3
7700000000004300030
66áâà4,66áâà1,66áâà2,66áâà3
7700000000004300031
66áâà4,67,67áâà2,67áâà5,67áâà6,67áâà7
7700000000004300032
67áâà8,67áâà10,67áâà14,67áâà14,68,68
7700000000004300033
68,68,68áâà1,68áâà2,68áâà3
7700000000004300034
68áâà4,69,69áâà3,69áâà4,69áâà6,69áâà8
7700000000004300035
69áâà10,69áâà11,69áâà12,69áâà13
7700000000004300036
69áâà14,70,70áâà1,70,71,71áâà2,71áâà3
7700000000004300037
71áâà4,71áâà5,71áâà6,71áâà7,71áâà8
7700000000004300038
71áâà9,71áâà10,71áâà11,71áâà12,71áâà13
7700000000004300039
71áâà14,71áâà15,71áâà16,71áâà17
7700000000004300040
71áâà18,71áâà19,71áâà20,71áâà21
7700000000004300041
71áâà22,73áâà1,73áâà2,73/43,75
7700000000004300042
20,22ª1,22ª1áâà1,22ª1áâà2,22ª2
7700000000004300043
22ª2áâà1,22ª4,24,24áâà3,24,24
7700000000004300044
24áâà3,26ª1,26ª2,26ª3,26,28,30/2
7700000000004300045
30/2áâà2
7700000000004300046
1,1áâà1,1áâà2,1áâà2,1áâà2,1áâà3
7700000000004300047
1áâà4,1áâà5,1áâà6,1áâà7,1áâà8,1áâà9
7700000000004300048
1áâà10,1áâà11,1áâà12,1áâà15,1áâà16
7700000000004300049
1áâà19,1áâà20,1áâà21,1áâà22,1áâà45
7700000000004300050
1áâà5,1áâà8,1áâà12,1áâà13,1áâà17
7700000000004300051
1áâà34,1áâà1,1áâà2,1áâà6,2,2áâà2
7700000000004300052
2áâà3,2áâà4,2áâà5,2áâà6,2ª2,2ª3,2ª4
7700000000004300053
2ª5,2,4ª1,4ª2,4,6ª1,6ª2,6,8áâà3,8ª1
7700000000004300054
8ª2,10ª1,10ª2,12,14,14áâà2,15,16
7700000000004300055
16áâà1,19ª3
7700000000004300056
7700000000004310001
1áâà6,1áâà7,1áâà8,1áâà9,1áâà10
7700000000004310002
1áâà11,3,4,8,9,11,12,13,15,16,17,18
7700000000004310003
19,20,22,23,24,25,25áâà1,26,27,28
7700000000004310004
3ª1,3ª2,3ª3,3ª4,3ª5,3,3áâà2,3áâà3,4
7700000000004320001
4áâà2,4áâà3,5,5áâà2,5,5áâà1,5áâà2
7700000000004320002
5áâà3,5áâà4,5áâà5,5áâà7,5,5áâà2
7700000000004320003
5áâà3,6áâà9,6ª1,6ª2,6ª3,6ª4,6ª5,6ª6
7700000000004320004
6ª7,6ª8,6ª9,6ª10,6ª11,6ª12,6ª13,6ª14
7700000000004320005
6ª15,6ª18,6ª19,6ª20,6ª21,6ª21,6ª22
7700000000004320006
6ª25,6ª27,6ª28,6ª29,6ª30,6ª31,6ª32
7700000000004320007
6ª33,6ª34,6ª35,6ª36,6ª37,6ª38
7700000000004320008
7,7áâà2,7áâà3,7áâà4,7áâà5,7áâà6,7áâà7
7700000000004320009
7áâà8,7,9,9áâà2,9áâà3,9áâà4,9áâà5
7700000000004320010
7700000000004320011
9áâà12,9áâà15,9áâà17,9áâà18,9áâà19
7700000000004320012
9áâà1,10,10áâà1,10áâà2,10áâà4,10áâà5
7700000000004320013
10áâà6,10áâà10,10áâà15,10,10áâà2
7700000000004320014
10áâà3,11,11áâà1,11áâà2,11áâà3,11áâà4
7700000000004320015
11áâà5,11áâà6,11áâà7,11áâà8,11áâà28
7700000000004320016
7700000000004320017
7700000000004320018
11áâà37,11áâà40,11áâà41,11áâà43
7700000000004320019
11áâà44,11áâà46,11áâà47,11áâà48,11
7700000000004320020
11áâà2,11áâà3,11áâà4,11áâà6
7700000000004320021
11áâà7,12áâà1,12áâà3,12áâà4,12áâà5
7700000000004320022
12áâà6,12áâà7,12áâà8,12áâà11,12áâà24
7700000000004320023
13,13áâà1,13áâà2,13áâà3,13áâà5,13áâà6
7700000000004320024
7700000000004320025
7700000000004320026
13áâà17,13áâà18,13áâà22,15,15áâà2
7700000000004320027
15áâà5,15áâà6,15áâà8,15,15áâà1
7700000000004320028
15áâà3,15áâà5,15áâà6,17,17áâà2
7700000000004320029
17áâà3,17áâà4,17áâà5,17áâà6,17áâà7
7700000000004320030
17áâà8,17áâà9,17áâà10,17áâà11,17áâà12
7700000000004320031
17áâà13,17áâà14,17áâà15,17áâà16
7700000000004320032
17áâà17,17áâà20,17áâà21
7700000000004320033
19/18,21,22ª1,22ª2,22ª3,22ª4,23ª1,23ª3
7700000000004320034
23,24ª1,24ª2,24ª3,24ª4,24ª4áâà6
7700000000004320035
24ª4áâà7,25áâà4,25áâà5,25ª1,25ª2
7700000000004320036
25ª2áâà3,25ª3,25ª4,25ª5,25ª6,25ª6áâà2
7700000000004320037
26ª1,26ª2,26ª3,26ª4,27ª1,27ª2,27ª2áâà3
7700000000004320038
28ª1,28ª2,28ª2áâà2,28ª3,28ª4,28ª5
7700000000004320039
29áâà3,29áâà4,29ª1,29ª2,30,30áâà2
7700000000004320040
30áâà4,30áâà7,31áâà3,31ª1,31ª2,32/7,33
7700000000004320041
14ª1,14ª2,14ª3,14ª4,16ª1,16ª1áâà4,16ª2
7700000000004320042
18ª1,18ª2,18ª3,18ª4,20,20áâà3
7700000000004320043
13,15,15áâà1,15ª1,15ª1áâà1,15ª2
7700000000004340001
15ª2áâà4,15ª3,15ª3áâà2,15ª4,15
7700000000004340002
15áâà1,15áâà2,17ª1,17ª2,17ª3
7700000000004340003
3,4,5ª1,5ª2,5ª2áâà3,7,7áâà2,8,9ª1,9ª2
7700000000004340004
9ª2áâà11,9ª3,10ª1,10ª2,11,11,12ª1
7700000000004340005
12ª2,12,12áâà2,14,14áâà2,14,16
7700000000004340006
18áâà3,18ª1,18ª2,18,20,20áâà2,20áâà3
7700000000004340007
22,22áâà2,22áâà3,22áâà4,22áâà5,22áâà6
7700000000004340008
22áâà7,22áâà8,22áâà10,22áâà12,22áâà13
7700000000004340009
22áâà14,22áâà15,22áâà16,22áâà17
7700000000004340010
22áâà17,22áâà18,22áâà19,22áâà20
7700000000004340011
22áâà21,22áâà22,22áâà23,22áâà24,22áâà25
7700000000004340012
3,4,4,4,5,5áâà2,5áâà3,5,6,6áâà1,7
7700000000004350001
7áâà2,7,7áâà2,8,8áâà2,8áâà3,8áâà4
7700000000004350002
8áâà5,8áâà6,8áâà7,8áâà12,9/58áâà1,10
7700000000004350003
10áâà2,10áâà3,10áâà4,10áâà5,10áâà6
7700000000004350004
10áâà8,10áâà9,10,10áâà2,10áâà3
7700000000004350005
10áâà4,10áâà5,10áâà6,10áâà7
7700000000004350006
10áâà8,10áâà9,10áâà10,10áâà11
7700000000004350007
10áâà12,10áâà13,10áâà14,10áâà15
7700000000004350008
10ª2,10ª3,10ª4,10ª5,10ª6,10ª7
7700000000004350009
10ª8,10ª9,10ª10,10ª11,10ª12
7700000000004350010
10ª13,13
7700000000004350011
2ª5,2ª8,2ª9,3,4,4áâà2,6,7,8,8,9,10,11
7700000000004360001
12,13ª1,13ª2,13,14,15,15áâà2,15,15
7700000000004360002
16,17,18,19,19,19,20,21,21,21,22
7700000000004360003
22áâà1,23,23,24,25,26,27,28,29
7700000000004360004
29áâà1,29áâà2,29ª1,29ª2,30,31,31
7700000000004360005
32áâà1,32áâà2,32ª1,32ª2,33,34,34áâà1
7700000000004360006
35,35,36,37,37,37,38,38,39,39,40
7700000000004360007
41,41,42,42,43,43,43,45,45,47,47
7700000000004360008
49áâà1,49áâà2,49,51,53,55,57,59ª,59
7700000000004360009
1,2,5,5áâà2,5áâà3,5áâà5,5áâà6
7700000000004370001
5áâà1,7,7áâà1,7áâà2
7700000000004370002
2,2áâà1,2áâà2,3,3áâà1,3áâà2
7700000000004380001
3áâà3,3áâà1,5,5,10,12áâà1
7700000000004380002
2,2/1,2,2,3áâà1,4,4áâà2,5,5áâà1
7700000000004390001
5áâà1,5áâà2,6ª1,6ª2,6,7áâà1,7áâà2
7700000000004390002
7,8ª1,8ª1áâà1,8ª1áâà3,8ª3,10ª1,10
7700000000004390003
10,10áâà1,10,10,11áâà1,12ª1,12ª2
7700000000004390004
12ª2áâà1,12ª2áâà3,12,12,14,16,16áâà2
7700000000004390005
16áâà3,16,16áâà1,19,22ª1,22ª1áâà2
7700000000004390006
22ª1áâà3,22ª2,22ª2áâà1,22,24,24áâà2
7700000000004390007
24,24
7700000000004390008
1,2,3,4,6,7,8,8áâà,8áâà1,9,9áâà1,10
7700000000004400001
11,12,12,13,14,15,16,17,18,19,20,21
7700000000004400002
21,22,23,23áâà1,24,25,26,27,28,29,30
7700000000004400003
31áâà1,31áâà2,31áâà3,32,32,33,35
7700000000004400004
37áâà,37áâà,39,41,43,43áâà2,45,45ª
7700000000004400005
47,47,47áâà5
7700000000004400006
4áâà1,4áâà2,4áâà3,6,6áâà1,6áâà2
7700000000004410001
6áâà3,6áâà4,6áâà5,6áâà6,6áâà7,6áâà8
7700000000004410002
6áâà9,6áâà10,6áâà11,6áâà12,6áâà13
7700000000004410003
6áâà14,6áâà15,6áâà16,6áâà17,6áâà18
7700000000004410004
6áâà19,6áâà20,6áâà1,6áâà1,8,8áâà1
7700000000004410005
7700000000004410006
7700000000004410007
8áâà13,8áâà14,8áâà15,8áâà16,8áâà17
7700000000004410008
8áâà18,8áâà19,8áâà20,8áâà21,8áâà22
7700000000004410009
8áâà23,8áâà24,8áâà25,8áâà26,8áâà27
7700000000004410010
8áâà28,8áâà29,8áâà30,8áâà31,8áâà32
7700000000004410011
8áâà33,8áâà34,8áâà35,8áâà36,8áâà37
7700000000004410012
8áâà38,8áâà39,8áâà40,8áâà41
7700000000004410013
10,11ª1,11ª1áâà1,11ª2,11,11áâà1,11
7700000000004410014
13,13,13,15ª1,15ª2,15ª3,15,15,16
7700000000004410015
16áâà2,16áâà1,18,18áâà1,18áâà1,20,21
7700000000004410016
21,23ª1,23ª2,23ª2áâà1,26,26áâà1
7700000000004410017
26áâà2,26áâà3,26áâà4,26áâà5,26áâà6
7700000000004410018
26áâà7,26,27,29,29ª1,29ª2,29ª3,29
7700000000004410019
29áâà1,29,31,33ª1,33ª2,33ª3,37ª1
7700000000004410020
37ª2,37ª3,39,41,43,43áâà1,45,51,53
7700000000004410021
7700000000004410022
3/17,5ª1,5ª2,5,5,7ª1,7ª1áâà1,7ª2,7ª3
7700000000004410023
7,7
7700000000004410024
14ª1,14ª2,14ª3,14ª3áâà1,15
7700000000004420001
2/23,4,6ª1,6ª2,6,8ª1,8ª2,8ª3,9,9áâà2
7700000000004420002
10,10áâà2,11,11áâà2,11áâà3,12ª1,12ª2,13
7700000000004420003
1/3,3ª1,3ª1áâà2,3ª1áâà3,3ª2,3ª2áâà1,3
7700000000004430001
3áâà1,5ª1,5ª2,5ª2áâà1,5ª2áâà3,5,7
7700000000004430002
7ª1,7ª1áâà2,7ª2,7ª2áâà2,7,7,9,9,9
7700000000004430003
9,11ª1,11ª1áâà2,11ª2,11ª2áâà2
7700000000004430004
11ª2áâà3,11ª2áâà4,11,13áâà2,13áâà3
7700000000004430005
13ª1,13ª1áâà2,13ª2,13ª2áâà2,13ª3,13
7700000000004430006
13,15ª1,15ª2,15ª3,15
7700000000004430007
2,4,4,4,6,6áâà2,6,6,8,8,8,10
7700000000004430008
10,10,14,14áâà1,14áâà2,16ª1,16ª2,18
7700000000004430009
18áâà1,20,22
7700000000004430010
20,20áâà2,20,22,22áâà1,24,26,28,30
7700000000004440001
30áâà2,32,35áâà1,35,35,37áâà1,37ª2
7700000000004440002
37ª2áâà2,37/18,39ª1,39ª1áâà2,39ª2,39
7700000000004440003
1ª1,1ª1áâà2,1ª1áâà4,1ª2,1,1
7700000000004440004
5,5áâà2,7ª1,7ª2,7ª2áâà1,7ª2áâà2
7700000000004440005
7ª2áâà3,7ª2áâà4,7,9ª1,9ª2,9ª3,9ª4,9
7700000000004440006
9,9,9áâà1,11áâà5,11áâà6,11ª1,11ª2
7700000000004440007
11ª3,11ª4,11ª5,11ª5áâà1,19
7700000000004440008
2,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6
7700000000004440009
2áâà7,2áâà8,2áâà20,2,2,2áâà6
7700000000004440010
4,4áâà1,4áâà6,4áâà7,4áâà11,4áâà12
7700000000004440011
4áâà13,4áâà14,4áâà15,4áâà16,4áâà17
7700000000004440012
4áâà18,4áâà19,4áâà20,4áâà21,4áâà22
7700000000004440013
4áâà23,4áâà24,4áâà25,4áâà26,4áâà27
7700000000004440014
4áâà28,4áâà29,4áâà30,4áâà32,4áâà33,4ª1
7700000000004440015
4ª2,4ª3,4ª4,4ª5,4ª8,4ª9,4ª10,4,6ª1
7700000000004440016
6ª2,6ª3,8,10ª1,10ª2,10ª2áâà2,12/23
7700000000004440017
12/23áâà2,14,14áâà2,14áâà3,16,16
7700000000004440018
16áâà1,16áâà2,18,21/2,21/2áâà1
7700000000004440019
21/2áâà2,21/2áâà3,25ª1,25ª2,25ª2áâà2
7700000000004440020
27,27áâà1,33,33áâà1,33,33áâà4
7700000000004440021
2áâà3,2áâà4,2ª1,2ª2,3,3áâà2,4,4,5
7700000000004450001
5áâà2,5,6ª1,6ª1áâà2,6ª2,6ª3,7,8,8,8
7700000000004450002
9,9,9,10ª1,10ª2,11,11áâà2,11,12
7700000000004450003
12áâà2,13,13áâà2,14áâà1,14áâà3,14/9,15
7700000000004450004
1,1áâà1,1áâà2,8áâà5,12,12,12áâà4,14
7700000000004460001
17,19,19,19,21,21áâà2
7700000000004460002
7700000000004470001
4,6áâà3,6ª1,6ª2,22,22ª1
7700000000004470002
19,19ª1,19ª2,21ª1,21ª2,21ª3,21ª4,21ª5
7700000000004470003
23ª1,23ª2,23ª3,25áâà5,25ª1,25ª2,25ª3
7700000000004470004
25ª3áâà2,25ª4,25ª5,25,27,27áâà2,27ª1
7700000000004470005
27ª2,27ª3
7700000000004470006
12,14,14,14áâà2,14áâà3,14ª3,16ª1
7700000000004470007
16ª2,18ª1,18ª2,18ª2áâà2,20ª1,20ª2,20
7700000000004470008
20áâà1,20áâà3,20áâà4,20áâà5
7700000000004470009
20áâà6,20áâà7,20áâà8
7700000000004470010
2,2áâà1,3,4,6áâà7,6ª1,6ª2,6ª3,6ª4,7
7700000000004480001
8ª1,8ª2,9ª1,9ª2,10,10áâà2,10,10áâà1
7700000000004480002
12ª1,12ª2,12ª2áâà2,12,12áâà2,13ª1
7700000000004480003
13ª2,14/9,14/9áâà3,15áâà2,15áâà8,15ª1
7700000000004480004
15ª2,15,17áâà1,17áâà2,20ª1,20ª2,20ª3
7700000000004480005
20ª4,22,22áâà1,22ª1,22ª2,24
7700000000004480006
4ª1,4ª2,4ª3,4ª4,4ª4áâà2,4ª4áâà3,6
7700000000004490001
6áâà2,6áâà3,6áâà4,6áâà5,6áâà6
7700000000004490002
8/22áâà4,8/22ª1,8/22ª2,8/22ª3,8/22ª4
7700000000004490003
8,8,10ª1,10ª2,10ª3,10ª3áâà1,10,12ª1
7700000000004490004
12ª1áâà3,12ª2,12,12,12áâà2,12
7700000000004490005
14áâà1,14áâà2,14áâà7,14ª1,14ª2,14ª3
7700000000004490006
14ª3áâà2,14ª4,14ª4áâà1,14ª4áâà2,14ª5
7700000000004490007
14ª5áâà1,16,16,18ª1,18ª1áâà2,18ª2
7700000000004490008
1,1áâà1,3áâà1,3,5,5áâà1,5áâà2
7700000000004490009
7700000000004490010
5áâà9,5áâà10,5áâà11,5áâà12,5áâà13
7700000000004490011
5áâà14,5áâà15,5áâà21,5áâà22,5áâà23,5
7700000000004490012
7,20,20,22ª1,22ª1áâà2,22ª2,24,24áâà2
7700000000004490013
2áâà5,2áâà6,2ª1,2ª2,2ª3,2ª4,4áâà4
7700000000004500001
4áâà5,4ª1,4ª1áâà3,4ª2,6,6áâà2,8,8,8
7700000000004500002
8,8,10,10,10áâà2,12,12áâà2,12áâà3
7700000000004500003
12,14
7700000000004500004
1ª1,1ª2,1ª3,1ª3áâà2,1ª3áâà3,1ª4
7700000000004500005
1ª4áâà1,1ª5,1ª5áâà1,3,3áâà2,3áâà3,5,7
7700000000004500006
1,1áâà1,1áâà2,1áâà3,1áâà11,1áâà12
7700000000004510001
1áâà13,1áâà14,1áâà15,3,9,11,11,13
7700000000004510002
15,25áâà1,25áâà2,25áâà3,25áâà4
7700000000004510003
30/2,32,34áâà3,34ª1,34ª2,34,36ª1,36ª2
7700000000004510004
38,38ª1,38ª1áâà1,38ª2,40áâà1,40áâà3
7700000000004510005
40ª1,40ª2,40,40,42,42ª1,42ª2,42ª3,46
7700000000004510006
46áâà1,46áâà2,48áâà1,48áâà2,48áâà3
7700000000004510007
2/3,4,6ª1,6ª2,6ª3,8ª1,8ª2,8ª2áâà1,8ª3
7700000000004510009
8ª4,10ª1,10ª1áâà1,10ª2,10ª3,10ª4
7700000000004510010
12ª1,12ª2,12ª3,12ª4,12ª5,12ª5áâà1,12
7700000000004510011
12,14ª1,14ª2,14ª3,14ª3áâà1,14ª4,14
7700000000004510012
14áâà1,16ª1,16ª2,16ª3,16,16,18ª1
7700000000004510014
18ª1áâà1,18ª2,18ª3,18ª4,18ª5,18ª5áâà1
7700000000004510015
18ª6,18ª7,18,20,20áâà1,20ª1,20ª1áâà1
7700000000004510016
20ª2,20ª3,20ª4,20ª5,20ª6,20,22ª1,22ª2
7700000000004510017
22ª3,22,22,24ª1,24ª2,24ª3,24,26ª1
7700000000004510018
26ª2,26ª3,26ª3áâà1,26,26áâà1,26,28
7700000000004510019
1,2,2,3,4,5,7,8,8,9,10áâà,10áâà
7700000000004520001
10,10,10,11,12,13,14,15,16,17,19,20
7700000000004520002
20,21,21,22,23,23,24,25,26,27,28,29
7700000000004520003
30,30áâà,31,31,31,32,32,33,33,33
7700000000004520004
37,38,38áâà1,38áâà2,39,39,39,40
7700000000004530001
40,40,41,41,41,42,44,44,44,45
7700000000004530002
45,45,48,48áâà2,48áâà3,48áâà4,48áâà5
7700000000004530003
48áâà6
7700000000004530004
2/51,4,6,8,8áâà2,8,10ª1,10ª2,12,14ª1
7700000000004540001
14ª2,14ª2áâà2,14ª3,16ª1,16ª2,16ª2áâà1
7700000000004540002
16,18ª1,18ª2,18,18áâà2,20,20áâà2
7700000000004540003
22ª1,22ª2
7700000000004540004
1,3,3áâà2,5,7
7700000000004540005
4,6áâà2,6ª1,6ª2,6ª3
7700000000004550001
15ª1,15ª1áâà2,15ª4,17,17áâà1,17áâà3
7700000000004550002
17áâà5,17áâà6,17áâà7,17áâà8,17áâà9
7700000000004550003
17áâà10,17áâà11,17áâà12,17áâà13
7700000000004550004
17áâà14,17áâà15,17áâà16,17áâà19
7700000000004550005
17áâà20,17áâà22,17áâà23,17áâà25,17ª1
7700000000004550007
17ª3,17ª5,17ª6,17ª8,17ª9,17ª11,17ª14
7700000000004550008
17ª19,17ª20,17ª25,17,17ª1,17ª2
7700000000004550009
17ª3,17ª4,17ª5,18ª1,18ª2,19,20
7700000000004550010
20áâà2,22áâà4,22áâà6,22áâà8,22ª1,22ª2
7700000000004550011
22ª3,24,24áâà1,24áâà2,24áâà3,24ª1,26ª4
7700000000004550012
28,28áâà2,28,28áâà2,28áâà3,30,30ª1
7700000000004550013
1,1áâà1,3,3áâà1,3áâà2,5áâà8,5ª1
7700000000004550014
5ª1áâà7,5ª2,5ª2áâà2,5ª2áâà3,5ª3,5,7ª1
7700000000004550015
7ª2,7ª3,7ª4,8ª1,8ª2,8,8áâà1,9ª1,9ª2
7700000000004550016
10ª1,10ª2,11,11áâà2,14,15ª1áâà4,16ª1
7700000000004550017
37,37áâà5,37,37,39,41,43,45,48ª1
7700000000004550019
48ª2,50,52,54,56,56áâà3
7700000000004550020
30ª2
7700000000004550021
21ª1,21ª2,27,29,29áâà1,29,31,31áâà1
7700000000004550022
31áâà3,31áâà1,31áâà7,32áâà3,32ª1
7700000000004550023
32ª2,33,34áâà4,34ª1,34ª2,34ª2áâà3,35
7700000000004550024
42ª1,42ª2,44,46ª1,46ª2
7700000000004550025
7700000000004550006
6,8,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5
7700000000004560001
8áâà6,8áâà7,8áâà8,8áâà11,8áâà12,8,10
7700000000004560002
10áâà2,10áâà3,10áâà4,10áâà5,10
7700000000004560003
10áâà2,10áâà3,10áâà6,10áâà7
7700000000004560004
1áâà1,1áâà2,2áâà1,3ª1,3ª2,3ª2áâà1
7700000000004560005
3ª2áâà2,3áâà1,4,4áâà2,4áâà3,4áâà1
7700000000004560006
4áâà2,4áâà3,4áâà4,4áâà5,4áâà6,5
7700000000004560007
5áâà4,7,9ª1,9ª2,9ª3,9ª3áâà3,11ª1,11ª2
7700000000004560008
11ª3,11ª3áâà4,11ª4,11ª4áâà3,11ª5,11
7700000000004560009
13,13,15áâà7,15áâà10,15ª1,15ª2,15ª3
7700000000004560010
15ª4,15ª5,15ª6
7700000000004560011
2,3,4,4,5,6,7,8,8áâà1,9,10,11,12,13
7700000000004570001
14,15,16,17,18,18,19,20,21,22,23
7700000000004570002
24áâà1,24áâà2,24ª1,24ª2,25,25,26,27
7700000000004570003
28,29,30,31,32,33,34,35,36,36,37,37ª2
7700000000004570004
38,38áâà2,39,39ª6,40,40áâà1,41,42
7700000000004570005
42áâà1,43,45
7700000000004570006
2,4áâà1,8,10,10áâà1,12,12áâà1
7700000000004580001
17áâà1
7700000000004580002
1,1áâà1,3ª1áâà1,3ª2,5,7ª1,7ª2,7ª3,9
7700000000004580003
9áâà1,9,14,15,15áâà2,15áâà3,15,16ª6
7700000000004580004
1,1,2áâà1,2áâà1,2áâà2,2áâà3,2áâà4
7700000000004590001
2áâà5,2áâà7,2áâà9,2áâà11,2áâà15,2áâà16
7700000000004590002
2áâà18,2áâà19,2áâà20,2áâà21,2áâà22
7700000000004590003
2áâà23,2áâà24,2áâà25,2áâà26,2áâà28
7700000000004590004
2áâà29,2áâà30,2áâà32,2áâà33,2áâà34
7700000000004590005
2áâà35,2áâà35,2áâà36,2áâà37,2áâà38
7700000000004590006
2áâà39,2áâà51,2áâà1,3,3,3,4
7700000000004590007
4áâà4,4,4áâà2,4áâà3,6áâà1,8áâà1
7700000000004590008
8áâà2,8áâà3,8áâà4,8áâà6,8áâà7,8áâà8
7700000000004590009
7700000000004590010
8áâà14,8áâà16,8áâà17,8áâà18,8áâà19
7700000000004590011
8áâà20,8áâà21,8áâà22,8áâà23,8áâà24
7700000000004590012
8áâà25,8áâà26,8áâà28,8áâà29,8áâà31
7700000000004590013
8áâà32,8áâà33,8áâà37,8áâà38,8áâà42
7700000000004590014
8áâà44,8áâà45,8áâà46,8áâà52,8áâà56
7700000000004590015
8áâà57,8áâà61,8áâà63,8áâà64,8áâà65
7700000000004590016
8áâà66,8áâà71,9,9áâà2,9áâà5,9áâà6,9
7700000000004590017
9,10,10áâà1,10áâà2,10áâà3,10áâà3
7700000000004590018
10áâà4,10áâà4,10áâà5,10áâà7,10áâà8
7700000000004590019
10áâà15,10áâà16,10áâà18,10áâà21
7700000000004590020
10áâà23,10áâà24,10áâà27,10áâà32
7700000000004590021
10áâà33,10áâà35,10áâà46,10áâà50,11
7700000000004590022
11áâà2,11áâà4,11áâà5,11áâà6,11áâà7
7700000000004590023
11áâà8,11áâà9,11áâà10,11áâà11,11áâà13
7700000000004590024
11áâà14,11áâà15,11áâà17,11áâà18
7700000000004590025
11áâà19,12áâà1,12áâà2,12áâà3,13
7700000000004590026
13áâà2,13áâà3,13áâà4,13áâà5,13áâà7
7700000000004590027
13áâà9,13áâà10,13áâà12,13áâà15,13áâà16
7700000000004590028
13áâà17,13áâà19,13áâà25,13áâà32
7700000000004590029
13áâà34,13áâà40,13áâà2,14áâà1,14áâà2
7700000000004590030
6,6áâà1,6áâà1,6áâà2,6áâà3,6áâà4
7700000000004610001
6áâà5,6áâà6,6áâà7,6áâà8,8,8áâà2,8
7700000000004610002
10,14,14áâà2,14áâà3,16
7700000000004610003
1áâà1,1áâà2,1áâà3,1áâà4,1áâà5
7700000000004620001
7700000000004620002
3,5áâà1,5áâà2,5áâà3,5,5áâà2,5áâà3
7700000000004620003
5áâà4,5áâà5,5áâà6,7,11,15,15áâà1
7700000000004620004
15áâà6,15áâà7,15áâà8,15áâà8,15áâà9
7700000000004620005
15áâà11,15áâà11,15áâà12,15áâà13
7700000000004620006
15áâà16,15áâà17,15áâà18,15áâà20
7700000000004620007
15áâà22,15áâà25,15áâà26,15áâà30
7700000000004620008
15áâà30,15áâà31,15áâà39,15áâà44
7700000000004620009
15áâà60,15áâà61,15áâà70,15áâà72
7700000000004620010
15áâà73,15áâà74,15áâà94,15áâà97
7700000000004620011
15áâà98,15ª1,15ª2,15ª3,15ª4,15ª36
7700000000004620012
15ª67,15ª68,15ª80,17,19,19áâà2,19áâà3
7700000000004620013
19áâà4,19áâà5,19áâà6,19áâà7,19áâà9
7700000000004620014
19áâà10,19áâà13,19áâà23,19áâà24
7700000000004620015
19áâà25,19áâà26,19áâà27,19áâà30
7700000000004620016
19áâà34,19áâà36,19áâà51,19áâà52
7700000000004620017
19áâà53,19áâà56,19áâà57,19áâà60
7700000000004620018
19áâà68,19áâà69,19áâà79,19áâà96
7700000000004620019
19áâà102,19áâà103,19áâà104,19áâà105
7700000000004620020
19áâà106,19áâà107,19áâà108,19áâà109
7700000000004620021
19áâà110,19áâà111,19áâà112,19áâà126
7700000000004620022
19ª1,19ª17,19ª21,19ª41,19ª101,19,19
7700000000004620023
7700000000004620024
2,2áâà1,3,3áâà2,3áâà3,3,3áâà3,4,6
7700000000004630001
6áâà2,10áâà1,12,12,14,15áâà1,15áâà2
7700000000004630002
20,20áâà2,27
7700000000004630003
3,4,5,5áâà63,5áâà64,5ª1,5ª2,5ª3,5ª4
7700000000004640001
5ª5,5ª6,5ª7,5ª8,5ª9,5ª10,5ª11,5ª12
7700000000004640002
5ª15,5ª16,5ª17,5ª18,5ª19,5ª20,5ª21
7700000000004640003
5ª22,5ª23,5ª26,5ª27,5ª28,5ª29,5ª31
7700000000004640004
5ª32,5ª33,5ª34,5ª37,5ª39,5ª40,5ª41
7700000000004640005
5ª43,5ª45,5ª46,5ª50,5ª58,5ª59,5ª60
7700000000004640006
1,1áâà1,1áâà2,3,3áâà2,3áâà3,5,5áâà1
7700000000004650001
7700000000004650002
5áâà9,5áâà10,5áâà11,5áâà12,5áâà14
7700000000004650003
5áâà15,5áâà16,5áâà17,5áâà18,5áâà19
7700000000004650004
5áâà20,5áâà21,5áâà22,5áâà23,5áâà24
7700000000004650005
5áâà25,5áâà26,5áâà27,5áâà28,5áâà29
7700000000004650006
5áâà30,5áâà31,5áâà32,5áâà33,5áâà34
7700000000004650007
5áâà35,5áâà36,5áâà37,5áâà38,5áâà39
7700000000004650008
5áâà40,5áâà41,5áâà42,5áâà48,5áâà49
7700000000004650009
5áâà50,5áâà53,5/1áâà1,5/1áâà4,5/1áâà6
7700000000004650010
5/1áâà13,5/1ª35,9,9áâà2,11,13,13
7700000000004650011
13áâà1,15,15áâà1,15áâà2,17,17áâà2
7700000000004650012
17áâà3,17áâà4,17ª2,17ª3,17ª4
7700000000004650013
7700000000004650014
2áâà8,2áâà9,2áâà10,2áâà11,2áâà12
7700000000004650015
2áâà13,2áâà14,2áâà15,2áâà16,2áâà17
7700000000004650016
7700000000004650017
7700000000004650018
2áâà28,2áâà29,2áâà30
7700000000004650019
1,1/40áâà2,1/40áâà3,2,3ª1,3ª1,3ª2
7700000000004660001
115408
7724
45296557000
3ª2,3ª3,3ª3áâà2,4,4áâà2,4áâà3,4áâà4,5
7700000000004660002
5áâà2,5áâà3,5ª2,6ª1,6ª1áâà2,6ª2,7ª1
7700000000004660003
7ª2,7ª2áâà3,8,8ª1,8ª1áâà1,8ª1áâà2,8ª2
7700000000004660004
8ª3,9ª2,9ª2áâà2,9ª3,9ª3áâà1,9ª3áâà4,9
7700000000004660005
10ª1,10ª1áâà1,10ª2,10ª3,11ª1
7700000000004660006
2,4,5,6,6áâà2,6ª1,7,8,8áâà2,9,9áâà2,10
7700000000004670001
115516
45296590000
11,12,13,14,14áâà2,15,16,17,17ª2,18,19
7700000000004670002
19áâà2,20,21,22,22áâà2,22ª2,23,23áâà2
7700000000004670003
25,25ª2,25ª2áâà2,26,26áâà2,26áâà3
7700000000004670004
7700000000004670005
26áâà9,26áâà10,27,27áâà2,28,28,29
7700000000004670006
29áâà2,31,31áâà2,31,32,32áâà2,32áâà3
7700000000004670007
32áâà4,32áâà5,32áâà6,32áâà7,32áâà8
7700000000004670008
1/8,2,3,4,4áâà5,5,6,7ª1,7ª1áâà2,7ª3,9
7700000000004680001
115563
45296577000
13,14,14áâà2,14áâà3,14áâà4,14áâà5
7700000000004680002
14áâà6,14áâà7,14áâà8,14áâà9,14áâà12
7700000000004680003
14áâà14,14áâà15,14áâà21,14áâà26
7700000000004680004
14áâà27,15,16,16áâà2,16áâà3,16áâà4
7700000000004680005
16áâà5,16áâà6,16áâà11,17,17áâà1,19ª1
7700000000004680006
19ª2,19ª2áâà2,19ª3,19ª4,21,21ª2,21ª3
7700000000004680007
23,23,25,25áâà2,25áâà3,25,25,27áâà1
7700000000004680008
27áâà2,29,29áâà2,29ª2,29ª2áâà2,29ª3
7700000000004680009
29,33/19,33/19áâà2
7700000000004680010
18,18áâà3,18,18,26,26áâà3,26áâà8
7700000000004680011
115583
45296579000
26áâà9,35,35áâà2,35,41,43,43áâà2
7700000000004680012
43áâà3,43ª2,45ª1,45ª2,45ª3,45,47
7700000000004680013
47áâà2,47áâà4,49ª1,49ª2,49ª3,49ª3áâà3
7700000000004680014
51ª1,51ª1,51ª2,51ª2áâà2,53ª1,53ª2
7700000000004680015
53ª2áâà2,53ª3,55,55ª2,57,59
7700000000004680016
3ª1,3ª2,5,7ª1,7ª2,7ª3,9ª1,9ª2,9ª2áâà2
7700000000004690001
115477
9ª3,11ª1,11ª2,13,13ª1,13ª1áâà2,13ª2
7700000000004690002
13ª3,13ª4,13,15,15áâà2,15áâà3,15áâà4
7700000000004690003
7700000000004690004
15áâà10,15áâà11,15áâà12,17,19,21ª1,21ª2
7700000000004690005
áâà1,áâà2,2áâà1,2áâà2,2áâà3,2áâà4
7700000000004690006
7700000000004690007
2áâà11,2áâà12,2áâà13,2áâà14,2áâà15
7700000000004690008
2áâà16,2áâà17,2áâà20,2áâà21,25/49,27
7700000000004690009
27áâà2,27ª2,30,31ª2,31ª2áâà2,31ª3,31ª4
7700000000004690010
33,33áâà2,35ª1,35ª2,35ª3,35ª3áâà2
7700000000004690011
35ª3áâà3,35ª4,36,36,36áâà1,37ª1
7700000000004690012
37ª2,37ª2áâà3,37ª3,37ª4,37ª5,39ª1,39ª2
7700000000004690013
39ª3,41ª1,41ª2,41ª2áâà2,41ª2áâà3,41ª3
7700000000004690014
41ª4,43ª1,43ª2,45ª1,45ª1áâà2,45ª2,47ª1
7700000000004690015
47ª2,47ª2áâà2,49ª2,49ª2áâà2,49ª3,51
7700000000004690016
51áâà2,51ª2,51
7700000000004690017
37ª1,37ª1áâà2,37ª2,37ª3,37,37,39
7700000000004700001
115372
45296553000
39áâà2,41/7,45ª1,45ª1áâà2,45ª3,47áâà3
7700000000004700002
47ª1,47ª1áâà3,47ª1áâà4,47ª2,47,49ª1
7700000000004700003
49ª2,49ª3,49ª3áâà2,49ª4,49ª4áâà2,49ª5
7700000000004700004
51ª1,51ª1áâà2,51ª2,53ª2,53ª3,53/1
7700000000004700005
53/1áâà4,55áâà3,55ª1,55ª1áâà2,55ª1áâà3
7700000000004700006
55ª2
7700000000004700007
1ª1,1ª1áâà2,1ª2,1ª2áâà2,1ª3,1ª3áâà2,2
7700000000004700008
115404
3,3ª1,3ª2,3ª3,3ª3áâà2,3ª3áâà3,4,5ª1
7700000000004700009
5ª2,5ª2áâà3,6,7ª1,7ª1áâà1,7ª3,7,8,8
7700000000004700010
9,9ª1áâà3,9,10,10áâà2,10áâà3,11ª1
7700000000004700011
11ª2,11ª2áâà2,11ª3,12ª1,12ª2,12ª3,13ª1
7700000000004700012
13ª2,13ª3,13ª4,14ª1,14ª1áâà3,14ª2,15
7700000000004700013
15áâà2,15,16,17,17áâà2,18ª1,18ª1áâà2
7700000000004700014
18ª2,19,20,20áâà2,21ª1,21ª2,21ª3,22
7700000000004700015
23ª1,23ª2,24ª1,24ª2,25,25áâà2,26,26
7700000000004700016
27,28,29ª1,29ª1áâà2,29ª2,29ª3,29,29
7700000000004700017
30,30áâà2,30áâà3,30ª2,30,31ª1,31ª2
7700000000004700018
31ª3,31,31,32,34,34áâà2,34áâà3
7700000000004700019
38,38áâà2,38áâà3,38áâà4,38áâà5,38áâà6
7700000000004700020
115547
38áâà7,38áâà8,38áâà13,38áâà18,38áâà19
7700000000004700021
38áâà21,44/6,46,46áâà2,48ª1,48ª1áâà2
7700000000004700022
48ª2,50,52ª1,52ª2,52ª2áâà2,52ª2áâà3
7700000000004700023
52ª3,52,56,56áâà2,56ª2,58ª1,58ª2
7700000000004700024
58ª2áâà2,58ª2áâà3,58ª3,58ª3áâà2
7700000000004700025
8ª1,8ª2,8ª2áâà2,8ª3,10ª1,10ª2,10ª3
7700000000004710001
115211
10ª4,10ª4áâà2,10ª5,10ª5áâà2,10ª6,10ª6
7700000000004710002
10ª6,12ª1,12ª2,12ª2áâà2,12ª3,12ª3áâà2
7700000000004710003
12ª4,12ª4áâà2,14ª1,14ª2,14ª2áâà2,14ª3
7700000000004710004
14ª4,14ª4,14ª4,14ª5,14ª5áâà2,14ª6
7700000000004710005
14,16ª1,16ª1áâà2,16ª2,16ª3,16ª3áâà2
7700000000004710006
16ª4,16ª5,16ª5,16ª5,16ª6,16,16áâà2
7700000000004710007
16áâà3,16áâà4,16áâà5,16áâà6
7700000000004710008
16áâà7,16áâà8,16áâà9,29,29áâà2
7700000000004710009
29áâà3,29áâà4,29áâà5,29áâà6,29áâà7
7700000000004710010
1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà7
7700000000004710011
45296569000
1áâà9,1áâà15,1áâà15,1áâà33,1áâà43
7700000000004710012
1áâà44,1áâà52,1áâà68,1áâà72,1áâà73
7700000000004710013
1ª3,1,1áâà2,1áâà3,1áâà4,1áâà5
7700000000004710014
1áâà6,1áâà7,1,1áâà2,1,1áâà1,3ª2
7700000000004710015
3ª2,5ª1,7ª1,7ª2,7ª2áâà1,7ª3áâà2,9
7700000000004710016
11áâà2,11áâà3,11ª1,11ª2,13ª1,13ª2
7700000000004710017
13ª2áâà2,13ª2áâà3,15ª1,15ª2,17ª1,19ª1
7700000000004710018
19ª3,19ª3áâà3,21ª1,21ª2,21,23ª1,23ª2
7700000000004710019
25ª1,25ª2,25,25,29,29áâà2,29áâà3
7700000000004710020
29áâà4,29áâà5,29áâà6,29áâà7
7700000000004710021
2áâà1,6ª1,6ª1áâà2,6ª2,6ª3,26ª1,28/1
7700000000004710022
28/1áâà2,30,30áâà2,30áâà3,31,31áâà1
7700000000004710023
31áâà2,31áâà3,31áâà4,31áâà5,31áâà6
7700000000004710024
31áâà7,31áâà8,31áâà9,31áâà10,31áâà11
7700000000004710025
31áâà12,31áâà13,31áâà14,31áâà16
7700000000004710026
31áâà17,31áâà18,31áâà19,31áâà20
7700000000004710027
31áâà21,31áâà22,31áâà24,31áâà25
7700000000004710028
31áâà26,31áâà28,31áâà30,31áâà31
7700000000004710029
31áâà33,31áâà34,31áâà36,31áâà37
7700000000004710030
31áâà38,31áâà39,31áâà40,31áâà41,32
7700000000004710031
32ª3,34ª1,34ª1áâà2,34ª2,34ª2áâà2,34ª3
7700000000004710032
36ª1,36ª2,38,42,42áâà2,42áâà3,42áâà4
7700000000004710033
44,44áâà2,46ª1,46ª2,46ª2áâà3,48ª1
7700000000004710034
48ª1,48ª2
7700000000004710035
áâà1,áâà2,áâà3,áâà4,áâà5,áâà6,áâà7
7700000000004710036
áâà8,áâà9,áâà10,áâà11,áâà12,áâà13
7700000000004710037
áâà16,áâà17,áâà18,áâà19,áâà20,áâà21
7700000000004710038
áâà22,áâà24,áâà25,áâà30,áâà31,áâà32
7700000000004710039
áâà33,áâà34,2,2,2áâà10,2,2,2,2áâà2
7700000000004710040
18ª1,18ª1áâà2,18ª2,18ª3,18ª3áâà2
7700000000004710041
115612
18ª3áâà3,18,20ª1,20ª1áâà2,20ª2,20ª3
7700000000004710042
20ª3,20ª3,22ª1,22ª1áâà2,22ª1áâà3
7700000000004710043
22ª2,22ª4áâà1,24/2,24
7700000000004710044
15ª2áâà3,15ª5áâà1,17ª1áâà3
7700000000004720001
45296565000
1ª1,1ª2,1ª2áâà2,1ª3,3ª1,3ª2,3ª3
7700000000004720002
3ª3áâà2,3ª3áâà3,3ª3áâà4,5,5áâà2,5ª1,5
7700000000004720003
7,7áâà2,7áâà3,8ª2,8ª2áâà2,9ª1,9ª2,9ª3
7700000000004720004
9ª3áâà2,9ª3áâà3,10ª1,10ª1áâà2,10ª2
7700000000004720005
11ª1,11ª1áâà2,11ª1áâà3,11ª1áâà4,11ª1
7700000000004720006
11ª2,11ª2áâà1,11ª3,11,12ª1,12ª1áâà2
7700000000004720007
12ª1áâà3,12ª2,13,14ª1,14ª2,14ª2áâà2
7700000000004720008
14ª2áâà3,15ª1,15ª1áâà2,15ª2,15ª2áâà2
7700000000004720009
15ª3,15ª4áâà1,15ª4áâà2,15ª4áâà3
7700000000004720010
15ª5áâà2,15,16,16áâà2,17ª1,17ª1áâà2
7700000000004720011
18ª1,18ª1áâà2,18ª2,18,19,19áâà2
7700000000004720012
19áâà3,19,20,22ª1,22ª1áâà2,22ª1áâà3
7700000000004720013
22ª1áâà4,24áâà2,24ª1,24ª2,26,26ª1,32
7700000000004720014
34,36ª1,36ª1áâà2,36ª1áâà3,36ª2,36ª3
7700000000004720015
36ª3áâà2,36ª3áâà3,36ª4,36ª5,36ª6
7700000000004720016
38áâà2,38ª1,38ª1áâà2,38ª1áâà3,40ª2
7700000000004720017
40ª3,40,42ª1,44ª1,44ª2,44ª2áâà2
7700000000004720018
44ª2áâà3,44ª3,44ª3áâà2,44ª3áâà3,46ª1
7700000000004720019
46ª2,46ª3,46
7700000000004720020
4ª1,4,6,6áâà2,16ª1,16ª1áâà2,16ª2,16ª3
7700000000004730001
16ª5,16ª6,16ª6áâà2,18,18áâà3,18ª1
7700000000004730002
18ª1áâà2,18ª1áâà3,18ª1,18ª3,18ª3áâà2
7700000000004730003
18ª5,20ª1,20ª1áâà2,20ª1áâà3,20ª1áâà4
7700000000004730004
22,24,24,28áâà1,28áâà2,29,31,33ª1
7700000000004730005
33ª1áâà2,33ª1áâà3,33ª2,33ª2áâà2,35ª1
7700000000004730006
35ª2,35ª3,35ª3áâà2,35ª3áâà3,37ª1,39/12
7700000000004730007
8ª1,8ª2,8ª3,8ª4,10ª1,10ª1,10ª2,10ª3
7700000000004730008
39/12áâà2,39/12áâà3,39/12áâà4
7700000000004730009
21ª1,21ª2,21ª2áâà2,21ª3,21ª3áâà2,21ª4
7700000000004730010
10ª3áâà2,10ª4,21,21áâà2,21ª1,21ª1áâà1
7700000000004730011
21ª5,23ª1,23ª1áâà3,23ª1áâà4,23ª2,23ª3
7700000000004730012
23ª4,23ª4áâà3,25,25ª1,25ª1áâà2,25ª2
7700000000004730013
7700000000004740001
115201
1áâà6,1áâà8,1áâà9,1áâà10,1áâà14
7700000000004740002
1áâà15,1áâà16,1áâà17,1áâà18
7700000000004740003
1áâà20,1áâà22,1áâà23,1áâà24
7700000000004740004
1áâà25,1áâà26,1áâà27,1áâà28
7700000000004740005
1áâà29,1áâà30,1áâà31,1áâà32
7700000000004740006
1áâà33,1áâà34,1áâà35,1áâà36
7700000000004740007
1áâà37,1áâà38,1áâà39,1áâà40
7700000000004740008
1áâà42,1áâà43,1áâà44,1áâà45
7700000000004740009
1áâà46,1áâà47,1áâà48,1áâà49
7700000000004740010
1áâà53,1áâà54,1áâà60,1áâà62
7700000000004740011
1áâà63,2,2áâà2,2áâà3,2áâà4,2áâà5
7700000000004740012
2áâà6,2áâà7,2áâà8,2áâà9,2áâà10,2áâà11
7700000000004740013
2áâà12,2áâà13,2áâà15,2áâà16,2áâà17
7700000000004740014
7700000000004740015
7700000000004740016
2áâà36,2áâà42,2áâà48,2áâà65,2áâà66
7700000000004740017
1,1áâà2,1áâà7,1áâà8,4áâà1,4áâà2,4áâà3
7700000000004750001
45,45ª1,45ª2,45ª2áâà1,45ª2áâà2,47ª1
7700000000004760001
115230
45296571000
47ª1áâà2,47ª1áâà3,47ª2,47ª3,47ª4
7700000000004760002
47ª4áâà1,49ª1,49ª2,49ª3,49,51ª1
7700000000004760003
51ª1áâà2,51ª2,51ª3,53ª1,53ª2,53ª3,53ª4
7700000000004760004
53ª4áâà3,53ª4áâà5,55ª1,55ª2,55ª3,55ª4
7700000000004760005
55ª5,57,59ª1,59ª2,59ª3,59ª4,59ª4áâà2
7700000000004760006
59ª5,59ª5áâà2,59,59áâà2,59áâà3
7700000000004760007
59áâà5,61,61áâà1,65ª1,65ª2
7700000000004760008
34,34áâà2,34,34áâà2,34,34áâà2
7700000000004760009
7726
45296575000
34áâà3,34áâà4,34áâà5,36,36áâà2
7700000000004760010
36áâà3,36áâà3,36áâà4,36áâà5,36áâà6
7700000000004760011
36áâà7,36áâà8,36áâà9,36áâà11,36áâà12
7700000000004760012
36áâà14,36áâà15,36áâà16,36,36áâà2
7700000000004760013
36áâà3,36áâà4,36áâà5,36áâà6
7700000000004760014
36áâà7,36áâà8,36áâà9,36áâà10
7700000000004760015
36áâà11,36áâà12,36áâà13,36,36áâà2
7700000000004760016
36áâà3,36áâà4,36áâà4,36áâà5
7700000000004760017
36áâà6,36áâà7,36áâà8,38,38ª1,38
7700000000004760018
38áâà2,40,40áâà2,40áâà3,40áâà4,40,42
7700000000004760019
42áâà2,42áâà3,42áâà4,42áâà5,42áâà6
7700000000004760020
42áâà7,44,44áâà1,46,46áâà2,46áâà6
7700000000004760021
46áâà7,46áâà8,46áâà9,46áâà10,46áâà11
7700000000004760022
46áâà12,46áâà13,46áâà20,46áâà29,46
7700000000004760023
46áâà2,46áâà3,46áâà4,46áâà5,46
7700000000004760024
35,35áâà1,35áâà2,35áâà3,35áâà4,35áâà6
7700000000004760025
117105
35áâà7,35áâà8,35áâà9,35,37,37áâà2
7700000000004760027
37áâà3,37áâà5,37áâà6,37ª2,37ª4
7700000000004760029
37ª4áâà1,37ª4áâà2,37ª4áâà3,37ª4áâà6
7700000000004760030
37,37áâà2,37áâà3,37áâà4,37áâà5
7700000000004760031
37áâà6,37áâà7,37áâà8,37áâà10
7700000000004760032
37áâà11,37áâà12,37áâà17,37áâà45
7700000000004760033
37ª1,37ª1áâà2,37ª1áâà3,37ª1áâà4
7700000000004760034
37áâà1,37áâà2,37áâà3,37áâà4
7700000000004760035
37áâà5,37áâà6,37áâà7,37áâà9
7700000000004760036
37áâà10,37áâà11,37áâà12,37áâà13
7700000000004760037
37áâà14,37áâà16,39,39áâà1,39áâà3
7700000000004760038
39áâà4,39áâà5,39áâà6,39áâà7,39áâà9,39
7700000000004760039
39,39áâà2,39,43áâà1,43áâà2
7700000000004760040
43áâà3,43áâà4,43áâà5,43áâà6
7700000000004760041
43áâà7,43áâà8,43áâà9
7700000000004760042
1,1áâà1,1áâà2,1áâà3,1áâà5,1áâà6,1áâà10
7700000000004760043
45296561000
7700000000004760044
1áâà16,1áâà17,1áâà18,1áâà19,1áâà20,2
7700000000004760045
2áâà2,3,3áâà3,3áâà2,4,4ª2,4ª3,5,5áâà1
7700000000004760046
5áâà2,5áâà3,5áâà7,5áâà8,5ª1,5ª1áâà5
7700000000004760047
5ª4,5ª5,6,7ª1,8,8áâà2,8,9,9áâà1
7700000000004760048
9áâà1,9áâà1,9áâà2,9áâà3,9áâà4,9áâà5
7700000000004760049
9áâà6,9áâà7,9áâà8,9áâà9,9áâà12,9áâà27
7700000000004760050
10áâà2,10ª1,10ª1áâà2,10ª2,10ª3,10ª4
7700000000004760051
10,11,12,12,12ª1,12ª2,12ª2áâà2
7700000000004760052
12áâà1,12áâà2,12áâà3,12áâà4
7700000000004760053
12áâà5,12áâà6,12áâà7,12áâà8
7700000000004760054
12áâà9,12áâà10,12áâà11,12áâà12
7700000000004760055
12áâà13,12áâà14,12áâà15,12áâà16
7700000000004760056
12áâà17,12áâà19,12áâà20,12áâà21
7700000000004760057
12áâà25,12áâà26,12áâà27,12áâà35,13
7700000000004760058
13áâà2,13áâà4,13ª1,13,13áâà1,13áâà2
7700000000004760059
14áâà1,14áâà2,14áâà3,14áâà4,14áâà5
7700000000004760060
14áâà6,14áâà8,14áâà9,14áâà10,14áâà11
7700000000004760061
14áâà12,14áâà14,14áâà15,14áâà17
7700000000004760062
14áâà26,14áâà27,15,15áâà2,15áâà3,16
7700000000004760063
16áâà4,16ª1,16ª2,16ª3,16ª4,16ª5,16,17
7700000000004760064
17áâà2,17áâà3,17áâà4,17áâà5,17áâà6
7700000000004760065
17áâà7,17áâà8,17áâà9,17áâà11,18áâà4
7700000000004760066
18ª1,18ª1áâà5,18ª2,18ª3,18ª4,19,19áâà2
7700000000004760067
19áâà3,19áâà4,19áâà5,19,19áâà2
7700000000004760068
19áâà4,19áâà5,19áâà7,19áâà8,21,21
7700000000004760069
23,25,25áâà2,25áâà3,25áâà5,25,25áâà1
7700000000004760070
25áâà2,25áâà3,25áâà5,25áâà6
7700000000004760071
25áâà12,25áâà13,25áâà14,25áâà15,27
7700000000004760072
27áâà2,27ª1,27ª2,29,29ª1,29ª2,31,31ª2
7700000000004760073
33,33áâà1,33áâà2,33áâà3,33áâà4,33áâà5
7700000000004760074
33áâà6,33áâà7,33áâà8,33áâà12,33áâà13
7700000000004760075
24,26,26áâà2,26áâà3,26áâà4,26áâà5
7700000000004760076
26áâà6,26áâà7,26áâà8,26áâà9,26áâà10
7700000000004760077
26áâà11,26áâà12,26áâà13,26áâà32,26
7700000000004760078
26,28,28áâà2,28áâà4,28áâà6,28ª1
7700000000004760079
28ª1áâà2,28,28áâà2,28áâà3,28áâà4
7700000000004760080
28áâà5,28áâà15,28áâà16,28áâà17
7700000000004760081
28áâà18,28áâà19,28áâà1,28áâà2
7700000000004760082
28áâà3,28áâà4,28áâà6,28áâà7
7700000000004760083
28áâà10,28,28áâà2,28,28áâà2,30ª2
7700000000004760084
30ª3,30,30,30áâà2,30áâà3,30áâà4
7700000000004760085
30áâà5,30,32,32áâà2,32áâà3,32ª1
7700000000004760086
32ª1áâà2,32ª1áâà3,32ª1áâà4,32ª1áâà5
7700000000004760087
32ª1áâà6,32ª1áâà7,32ª1áâà8,32ª1áâà9
7700000000004760088
32ª1áâà10,32ª1áâà11,32ª1áâà12,32
7700000000004760089
32áâà3,32áâà4,32áâà6,32,32áâà2
7700000000004760090
248áâà1,248áâà2,248áâà3,248áâà4
7700000000004760091
117623
7727
45293594000
248áâà9
7700000000004760092
170,170áâà1
7700000000004760093
117405
170áâà22
7700000000004760094
45296595000
141áâà1,141áâà2,141áâà3,141áâà4
7700000000004760095
45296597000
141áâà5,141áâà6,141áâà7,141áâà8
7700000000004760096
141áâà9,141áâà10,141áâà11,141áâà12
7700000000004760097
141áâà13,141áâà14,141áâà15,141áâà16
7700000000004760098
141áâà17,141áâà18,141áâà19,141áâà20
7700000000004760099
141áâà21,141áâà22,141áâà27,141áâà30
7700000000004760100
141áâà33,141áâà34,141áâà34,141áâà48
7700000000004760101
141áâà49,141áâà78,141áâà79,141áâà80
7700000000004760102
141áâà81,141áâà82,141ª2,141ª2áâà2
7700000000004760103
141ª2áâà3,141ª2áâà5,141ª2áâà6
7700000000004760104
141ª2áâà7,141ª2áâà8,141ª2áâà9
7700000000004760105
141ª2áâà10,141ª2áâà11,141ª2áâà12
7700000000004760106
141ª2áâà13,141ª2áâà24,141ª3áâà2,141ª4
7700000000004760107
141ª4áâà1,141ª4áâà2,141ª4áâà3
7700000000004760108
141ª4áâà4,141ª4áâà6,141ª4áâà7
7700000000004760109
141ª4áâà8,141ª4áâà9,141ª4áâà11
7700000000004760110
141ª4áâà13,141ª4áâà17,141ª4áâà19
7700000000004760111
141ª4áâà20,141ª4áâà21,141ª5,141ª5áâà1
7700000000004760112
141ª5áâà2,141ª5áâà3,141,141,143
7700000000004760113
143áâà3,143ª1,143ª2,143ª3,143ª4
7700000000004760114
143ª4áâà3,143ª4áâà4,143ª5,143ª6,143ª7
7700000000004760115
143ª7áâà1,143ª7áâà2,143,143áâà2,143
7700000000004760116
143ª,143áâà3,143áâà4,143,149ª2
7700000000004760117
152ª1,152ª1áâà2,152ª1áâà3,152ª2
7700000000004760118
152ª2áâà1,152ª3,152ª3,152ª4,152ª6
7700000000004760119
152ª6áâà2,152ª6,152ª7,152ª7áâà1
7700000000004760120
152ª7áâà3,152ª8,152ª10,152ª11,152ª12
7700000000004760121
152ª12áâà2,152ª12áâà3,152ª13,152ª14
7700000000004760122
152ª15,152ª15áâà2,152ª16,152ª16áâà2
7700000000004760123
152ª16áâà3,152ª17,154ª1,154ª1áâà2
7700000000004760124
154ª2,154ª2áâà2,154ª2áâà3,154ª3,154ª4
7700000000004760125
154,154,154,156,158ª1,158ª1áâà2
7700000000004760126
158ª1áâà3,158ª2,170,170,170áâà1
7700000000004760127
170áâà2,170áâà3,170áâà4,170áâà5
7700000000004760128
170áâà6,170áâà7,170áâà8,170áâà10
7700000000004760129
170áâà11,170áâà12,170áâà13
7700000000004760130
170áâà14,170áâà22,170,170áâà2
7700000000004760131
170áâà3,170áâà4,170áâà5,170áâà6
7700000000004760132
170áâà7,170áâà8,170,170áâà3
7700000000004760133
170áâà4,170áâà5,170áâà8,170áâà21
7700000000004760134
170áâà26,170áâà28,170áâà29,170ª1
7700000000004760135
170ª1áâà1,170ª1áâà2,170,170
7700000000004760136
170áâà2,170áâà3,170áâà4,170áâà5
7700000000004760137
170áâà6,170áâà7,170áâà9,170áâà10
7700000000004760138
170áâà11,170áâà12,170áâà13
7700000000004760139
170áâà14,170áâà15,170áâà16
7700000000004760140
170áâà19,170áâà20,170áâà21
7700000000004760141
170áâà22,170áâà23,170áâà24
7700000000004760142
170áâà25,170áâà26,170áâà27
7700000000004760143
170áâà28,170áâà29,170áâà30
7700000000004760144
170áâà31,170áâà32,170áâà33
7700000000004760145
170áâà34,170áâà35,170áâà37
7700000000004760146
170áâà38,170áâà39,170áâà40
7700000000004760147
170áâà41,170áâà42,170áâà44
7700000000004760148
170áâà45,170áâà46,170áâà47
7700000000004760149
170áâà48,170áâà49,170áâà50,170
7700000000004760150
170áâà2,170áâà3,170áâà4,170áâà5
7700000000004760151
170áâà6,170áâà7,170áâà8,170áâà9
7700000000004760152
170áâà10,170áâà11,170áâà12
7700000000004760153
166áâà1,166áâà2,166áâà1,166áâà2
7700000000004760154
45293582000
166áâà1,166áâà2,166áâà3,166áâà4
7700000000004760155
166áâà5,166áâà6,166áâà7,166áâà8
7700000000004760156
166áâà9
7700000000004760157
145áâà1,145ª1,145ª2,145ª2áâà2
7700000000004760158
145ª2áâà3,145ª3,145ª4,145ª5,145ª6
7700000000004760159
145ª7,145ª8,145ª8áâà2,145ª8áâà3,147ª1
7700000000004760160
147ª2,147,149ª1,149ª1áâà2,149ª4,153
7700000000004760161
170áâà13,170áâà14
7700000000004760162
132,132áâà1,132áâà2,132áâà3,132áâà5
7700000000004760163
117519
132áâà7,132áâà8,132áâà9,132áâà10
7700000000004760164
132áâà11,132áâà12,132áâà13,132áâà14
7700000000004760165
132áâà15,132,132áâà1,132áâà2,132ª1
7700000000004760166
132,134,134áâà1,134áâà2,134áâà3,136
7700000000004760167
136áâà2,138,138,138áâà1,140áâà1
7700000000004760168
140áâà2,140áâà3,140áâà4,140áâà5
7700000000004760169
140áâà6,140áâà7,140áâà8,140áâà9,142
7700000000004760170
201,206áâà1,206áâà2,206,208áâà1
7700000000004760171
146,146áâà1,146áâà4,146,146,146,148
7700000000004760172
148áâà1,148ª1,148ª1áâà2,148ª1áâà3
7700000000004760173
144ª2áâà2,144ª2áâà3
7700000000004760174
133,133,150,150áâà1,150áâà2,150
7700000000004760175
117535
131ª1,131ª1áâà2,131ª2,131ª2áâà2,131ª3
7700000000004760176
117545
131ª4,131ª5
7700000000004760177
60,60ª2,62ª1,62ª2,64ª1,64ª1áâà1
7700000000004760178
117556
64ª1áâà3,64,66,66ª2,66ª2áâà2,67,68ª1
7700000000004760179
68ª2,68ª3,69ª1,69ª2,69ª2áâà3,69ª2áâà4
7700000000004760180
70ª1,70ª1áâà2,70ª2,70ª3,70ª3áâà2,71
7700000000004760181
71ª1,71ª2,71ª2áâà2,71ª3,72ª1,72ª2
7700000000004760182
72ª2áâà1,72ª3,73,73ª2,74ª1,74ª2,74ª3
7700000000004760183
75ª1,75ª2,75,76ª1,76ª2,77ª1,77ª2
7700000000004760184
78áâà1,78/2,78,79ª1,79ª1áâà2,79ª2,80
7700000000004760185
81ª1,81ª2,82,82áâà2,82áâà3,83áâà1,83ª1
7700000000004760186
83áâà1,83áâà2,83áâà3,83áâà4
7700000000004760187
83áâà5,83áâà6,83áâà7,83áâà8
7700000000004760188
83áâà9,83áâà10,83áâà11,84,85ª1,85ª2
7700000000004760189
85ª2áâà2,85ª3,85ª4,85ª5,86,86ª1,86ª2
7700000000004760190
32áâà3,32
7700000000004760191
86ª2áâà2,87,87áâà2,87,87,88,89
7700000000004760192
89áâà2,89áâà3,89áâà4,89,90ª1,90ª1áâà1
7700000000004760193
90ª2,90ª3,91,91áâà1,91áâà2,91áâà3
7700000000004760194
91áâà4,91áâà5,91áâà8,91áâà9,91áâà10
7700000000004760195
91áâà11,91áâà12,91áâà17,91,91áâà2,92
7700000000004760196
93,93áâà1,93áâà2,93áâà3,93áâà4,93áâà5
7700000000004760197
93áâà6,93áâà7,93áâà8,93áâà9,93áâà10
7700000000004760198
93áâà11,93áâà12,94,94áâà2,94áâà3
7700000000004760199
95,95áâà2,95áâà3,95áâà4,95áâà5,95áâà6
7700000000004760200
45296593000
95áâà12,95áâà14,95áâà16,95áâà23
7700000000004760201
94áâà4,98,100
7700000000004760202
95áâà27,95áâà30,95áâà46,95áâà52
7700000000004760203
95áâà53,95ª1,95,95áâà2,95áâà3,95
7700000000004760204
114,116
7700000000004760026
117587
150áâà1,150
7700000000004760205
114ª1,114ª1áâà2,114ª2,114ª2áâà2,114ª3
7700000000004760206
114ª3áâà2,114ª3áâà3,114ª4,118ª1,118
7700000000004760207
118áâà1,122,122áâà1,122áâà2,122áâà3
7700000000004760208
122,122áâà2,124,124áâà3,124ª1
7700000000004760209
124ª1áâà2,124,124,125áâà1,125áâà1
7700000000004760210
95áâà2,95,95,95,97
7700000000004760211
125áâà2,125áâà2,125áâà3,125áâà5
7700000000004760212
125áâà16,125áâà16,125áâà17,125áâà18
7700000000004760213
125áâà18,125áâà19,125áâà20,125áâà22
7700000000004760214
125áâà23,125áâà37,125áâà39,125áâà50
7700000000004760215
125ª3,125ª3áâà1,125ª3áâà3,125
7700000000004760216
125áâà18,125áâà18,125áâà18
7700000000004760217
125áâà1,125áâà2,125ª1,125ª1áâà2
7700000000004760218
125ª2,125ª3,125,125áâà1,125áâà2
7700000000004760219
125áâà3,125áâà4,125áâà8,125áâà9
7700000000004760220
125áâà10,125áâà11,125áâà12
7700000000004760221
125áâà13,125áâà14,125áâà15
7700000000004760222
125áâà17,125áâà18,125áâà20
7700000000004760223
125áâà21,125áâà22,125áâà23
7700000000004760224
125áâà32,125áâà40,125áâà41
7700000000004760225
125áâà42,125áâà44,125ª5,125ª6
7700000000004760226
125ª7,126,126áâà1,126áâà2,126
7700000000004760227
127,127,129,129áâà2,129ª1,129ª1áâà1
7700000000004760228
129ª1áâà2,129ª1áâà3,129ª1áâà4
7700000000004760229
129ª1áâà5,129ª2,129ª2áâà2,129ª2áâà3
7700000000004760230
129ª2áâà4,129ª2áâà8,129,129
7700000000004760231
172áâà1
7700000000004760028
99,99áâà1,99
7700000000004760232
135,135,135áâà2,135áâà3,135áâà4
7700000000004760233
135,172,172áâà1,172áâà2,172áâà3
7700000000004760234
172áâà5,172áâà6,172áâà7,172áâà8
7700000000004760235
172áâà9,172,178
7700000000004760236
126áâà1,126,128ª1,128ª1áâà2
7700000000004760237
192áâà2,192áâà3,194ª1,194ª2,196
7700000000004760238
142ª1,142ª1áâà1,142ª1áâà2,142ª1áâà3
7700000000004760239
174áâà1,174áâà2,174ª1,190ª1,190ª2,192
7700000000004760240
125áâà12,125áâà13,125áâà15,125áâà15
7700000000004760241
148ª1áâà5,148
7700000000004760242
196áâà1,196áâà2,196áâà3,196áâà6
7700000000004760243
210áâà1,210áâà2,210áâà3,210áâà4
7700000000004760244
210áâà5,214,226,238,242,244,246
7700000000004760245
248áâà5,248áâà6,248áâà7,248áâà8
7700000000004760246
179áâà1,207
7700000000004760247
167áâà1
7700000000004760248
50,52/2,56,56áâà2,56áâà3,56áâà4,56áâà5
7700000000004760249
117638
56áâà6,56áâà7,56áâà8,56áâà9,56áâà10
7700000000004760250
56áâà11,56áâà12,56áâà13,56áâà15
7700000000004760251
56áâà16,56áâà17,56áâà28,56áâà29
7700000000004760252
56áâà30,56áâà51,56áâà75,58áâà1,58áâà2
7700000000004760253
58áâà3,58áâà5,58áâà6,58áâà7,58áâà8
7700000000004760254
102,102áâà2,102áâà3,104,104áâà2,106
7700000000004760257
117639
106ª1,108ª1,108ª1áâà1,108ª1áâà2
7700000000004760258
2,3,4,4,4áâà2,4áâà3,4áâà4,5,6,7,8
7700000000004770001
8áâà2,10ª1,11,11áâà2,11áâà3,11áâà4,12
7700000000004770002
16,31,31,33,33áâà1,33ª1,33ª2,33ª3
7700000000004770003
33ª3áâà2,33ª3áâà3,33ª3áâà4,33ª3áâà5
7700000000004770004
33ª3áâà6,33ª3áâà7,33ª4,33ª5,33ª6
7700000000004770005
33ª6áâà2,33ª7,33ª8áâà1,33ª8áâà2
7700000000004770006
33ª8áâà3,33ª8áâà4,33ª8áâà5,33ª8áâà7
7700000000004770007
33ª8áâà8,35,35ª1
7700000000004770008
9ª1,9ª1áâà2,9ª2,11ª1,11ª1áâà2,11ª2
7700000000004780001
115597
11ª2áâà2,15áâà4,15ª1,15ª2,15ª2áâà2
7700000000004780002
15ª2áâà3,15ª2áâà4,15ª2áâà5,15ª3,17áâà2
7700000000004780003
17ª1,17ª2,17ª2áâà2,19ª1,19ª2,19ª3
7700000000004780004
19ª3áâà2,21ª1,21ª2,21ª3,21,23ª1,23ª2
7700000000004780005
23ª3,25,25ª1,25ª1áâà2,25ª1,25ª1,27ª1
7700000000004780006
27ª2,27ª3,29ª1,29ª2,31ª1,31ª2,31ª3
7700000000004780007
35/38áâà2,35/58
7700000000004780008
1/37,3,3áâà3,3ª2,5,5ª2,6,7,7ª2,8ª1,8ª2
7700000000004790001
8ª3,8ª4,8ª5,9,10,11/4,11/4áâà3,14ª1
7700000000004790003
14ª2,16,16,18,20ª1,22ª1,22ª2,24,24ª1
7700000000004790004
26ª1,26ª2,26ª3,26ª4
7700000000004790005
7700000000004790002
15,15áâà2,17,21,28ª1,28ª2,30,32ª1
7700000000004790006
32ª2,32ª2áâà2,32ª2áâà3,34ª1,34ª2,34ª3
7700000000004790007
34ª4,34ª5,34ª6,36ª1,36ª1,36ª2
7700000000004790008
36ª2áâà2,36ª3,38/43,43ª1,44ª1,44ª1áâà2
7700000000004790009
44ª1,44ª2,46,46ª1,46ª1áâà3,46ª2,46ª3
7700000000004790010
48ª1,52ª1,52ª1áâà2,54,56
7700000000004790011
2,2ª1,2ª2,2ª4,4,4áâà1,4ª1,4ª2,4ª3
7700000000004800001
115573
4ª3áâà3,4ª4,4ª4áâà2,4ª5,4ª5áâà2,4ª5
7700000000004800002
4ª6,4,6ª1,6ª2,6ª2,6ª3,6ª4,8ª1
7700000000004800003
8ª1áâà2,8ª2,8ª2áâà2,8ª3,8ª3áâà2,8ª4
7700000000004800004
8ª5,10ª1,12ª2,14,14ª1,14ª1áâà2
7700000000004800005
14ª1áâà3,14ª2,14ª3,16,16ª1,16ª2
7700000000004800006
16ª2áâà2,16ª2áâà3,18,18áâà1,18áâà3,20
7700000000004800007
22,26ª1,28ª1,28ª1áâà2,28ª2,30ª1,32ª1
7700000000004800008
32ª2,32,32,34ª1,34ª2,34ª3,34ª3áâà2
7700000000004800009
34ª4,34,36ª1,36ª2,36ª3,38ª1,38ª2
7700000000004800010
38ª2áâà2,40,42ª1,42ª1áâà2,42ª2,44/45
7700000000004800011
5ª1,5ª1áâà1,5ª1áâà2,5ª1áâà3,5ª1áâà4
7700000000004800012
115580
5ª2,5ª2,5ª2,5ª4,5ª5,5ª5,5ª6,7ª1,7ª4
7700000000004800013
7ª5,7ª6,9ª1,9ª2,9ª3,9ª3áâà2,9ª4,9ª5
7700000000004800014
9ª6,9ª6áâà2,9ª6,13,13áâà2,13,15áâà2
7700000000004800015
15ª1,15ª2,17ª1,17ª2,17ª3,17ª4,19ª1
7700000000004800016
19ª1áâà2,19ª3,19,21,23/56,25,27ª1
7700000000004800017
27ª2,27ª2áâà2,27ª2áâà3,27ª3,29ª1
7700000000004800018
29ª1áâà2,29ª1áâà3,29ª2,29ª3,31ª1,31ª2
7700000000004800019
31ª2áâà2
7700000000004800020
1áâà12,1áâà21,1áâà26,1áâà27,1áâà28
7700000000004810001
115569
1áâà29,1áâà30,1áâà35,1áâà36,1áâà37
7700000000004810002
1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà6,1áâà6
7700000000004810003
1áâà7,1áâà13,1áâà16,1áâà17,1áâà18
7700000000004810004
1áâà19,1áâà20,1áâà22,1áâà23,1áâà24
7700000000004810005
1áâà25,1áâà31,1áâà32,1áâà33,1áâà34
7700000000004810006
2áâà1,2áâà2,10áâà1,10áâà2,10áâà3,10áâà6
7700000000004810007
1ª1,1ª1áâà2,1ª2,1ª3,1ª3,3,3áâà2,3,3
7700000000004820001
115551
5ª3,5ª3áâà2,7ª1,7ª1áâà2,7ª2,7ª2áâà2
7700000000004820002
7ª4,9,9áâà2,9áâà3,11,11ª1,11ª1áâà2
7700000000004820003
11ª2,13,14,14áâà2,18,18áâà2,18ª2,20ª1
7700000000004820004
20ª2,20ª3,20ª3áâà2,20,20,22ª1,22ª2
7700000000004820005
22ª2áâà2,22ª3,22ª3áâà2,22ª4,22
7700000000004820006
4,4áâà2,4ª2áâà3,6ª1,6ª1áâà2,6ª2
7700000000004820007
6ª2áâà2,6ª3,8,8áâà2,12,12áâà2,12áâà3
7700000000004820008
12ª1,12,12
7700000000004820009
7700000000004820010
115582
15,17ª1,17ª2,23ª1,23,24ª1,24ª1áâà2
7700000000004820011
24ª2,24ª3,24ª4,24ª5,24ª6,24ª7,24,25ª1
7700000000004820012
27,27áâà2,27áâà3,28,28ª2,28ª2áâà2,29ª1
7700000000004820013
29ª1áâà2,31,31áâà2,31ª2,33,33áâà2,33
7700000000004820014
34ª1,34ª1áâà2,34ª1áâà3,34ª1,34ª2
7700000000004820015
34ª2áâà2,35ª2,37ª2,37ª2áâà2,38ª1,38ª2
7700000000004820016
38ª2áâà2,42,42áâà2,42ª2,42,44,44ª2,46
7700000000004820017
46áâà2
7700000000004820018
1,4,5,5áâà2,6,7,9
7700000000004830001
7700000000004840001
4ª1,7ª1,8ª1,8ª2,8ª2áâà2,8ª2áâà3,9ª1
7700000000004840002
9ª1áâà2,9ª1áâà3,9ª2,9ª3,10ª1,10ª1áâà2
7700000000004840003
10ª2,11ª1,11ª2,11ª2áâà2,12ª1,12ª2,12ª3
7700000000004840004
13,13,14,14áâà2,15,15ª2,16ª1,16ª1áâà2
7700000000004840005
16ª2,16ª2áâà3,16ª3,17,17ª1,17ª2
7700000000004840006
17ª2áâà2,17ª2áâà3,17ª3,18,19ª1,19ª1
7700000000004840007
19ª2,19ª2áâà2,19ª3,19ª4,20,20,21
7700000000004840008
22/25,23,24,26,26áâà2,26áâà3,26áâà4
7700000000004840009
26ª2,26ª2áâà2,26ª2áâà4,28,28áâà2,31ª1
7700000000004840010
31ª1áâà3,31ª2,33,33áâà2,33áâà3,33ª2
7700000000004840011
33ª3,35ª1,35ª1áâà2,35ª2,35ª2áâà2,35ª2
7700000000004840012
35ª3,35ª3áâà3,35ª3,35,37,37áâà2
7700000000004840013
37áâà3,37áâà4
7700000000004840014
2ª1,2ª2,2ª2áâà2,3,4ª1,4ª2,4ª3,5ª1,5ª2
7700000000004850001
115304
6ª1,6ª2,6ª3,7ª1,7ª2,8ª2,9ª2,9ª2áâà2
7700000000004850002
9ª2áâà3,10ª1,10ª2,10ª3,11ª1,11ª2,12ª1
7700000000004850003
12ª2,12ª3,12ª4,13ª1,13ª2,13,14ª1,14ª2
7700000000004850004
14ª2áâà3,15ª1,15ª2,15ª2áâà3,16ª1,16ª2
7700000000004850005
16ª3,16ª4,16ª5,17áâà1,17áâà2,17áâà7
7700000000004850006
17áâà12,17áâà13,17ª1,17ª2,17,18ª1
7700000000004850007
18ª2,19,20ª2,20ª2áâà2,21,21áâà3,22ª2
7700000000004850008
23,23áâà2,24ª1,24ª2,24ª2áâà2,25,25áâà2
7700000000004850009
26ª1,27,28ª1,28ª2,28,29,29áâà2,31,33,35
7700000000004850010
3ª1,3ª1áâà2,3ª2,5,5áâà2
7700000000004870001
1ª1,4,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000004870002
115598
4áâà6,4áâà7,4áâà7,4áâà8,4áâà9,4áâà10
7700000000004870003
4áâà11,4áâà12,10ª1,10ª2,10ª2áâà2
7700000000004870004
10ª2áâà4,10ª4,12ª1,12ª1áâà2,12ª2
7700000000004870005
13áâà2,14ª1,14ª2,15,16ª2,16ª2áâà2
7700000000004870006
16ª2áâà3,17,21ª1,21ª1áâà2,21ª2,23ª1
7700000000004870007
23ª1áâà2,23ª1áâà3,23ª2,23ª2áâà2
7700000000004870008
23ª2áâà3,25,25áâà2,27ª2,29,29áâà2
7700000000004870009
29áâà3,31
7700000000004870010
1,3ª1,3ª2,3ª3,3ª4,3ª5,5ª1,5ª1áâà2,5ª2
7700000000004880001
5ª3,5ª3áâà2,5,7ª1,7ª2,7ª3,9ª1,9/12,12
7700000000004880002
2,2áâà2,2,4,9,9áâà2,11,11áâà2,11áâà1
7700000000004880003
11áâà2,11áâà3,11áâà5,11áâà9,13,15
7700000000004880004
17ª1,17ª1áâà2,31,33,33áâà2
7700000000004880005
7700000000004890001
12,12ª1,14ª2,14ª2áâà2,16,16ª1,16ª1áâà3
7700000000004890002
16ª1áâà4,16ª2,17áâà1,17áâà2,17áâà3
7700000000004890003
17áâà4,17áâà5,18,18áâà2,20
7700000000004890004
1ª3,1ª3
7700000000004890005
7700000000004890006
3áâà1,3áâà2,3áâà3,3áâà4
7700000000004890007
115682
3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,22,24ª1
7700000000004890008
24ª2,24ª2áâà3,24ª2,24ª3,30ª1,30ª1áâà2
7700000000004890009
32ª1,32ª2,32ª2áâà2,32áâà1,32,34ª1
7700000000004890010
34ª1áâà2,34ª1áâà4,34ª2,34ª3,36ª1,36ª2
7700000000004890011
38ª1,38ª1áâà2,40/73
7700000000004890012
5,6ª1,6ª1áâà2,6ª2,6ª3,6áâà1,6áâà2
7700000000004900001
6áâà3,6áâà4,6áâà5,6áâà6,6áâà7
7700000000004900002
6áâà8,6áâà9,6áâà10,6áâà11,6áâà12
7700000000004900003
6áâà13,6áâà14,7,8ª1,8ª3,8ª3áâà3
7700000000004900004
8ª3áâà4,9,10ª1,10ª1áâà2,10ª1áâà3,10ª2
7700000000004900005
10ª2áâà2,10ª3,11,11ª2,12ª1,12ª3
7700000000004900006
12ª3áâà3,12ª3áâà4,12ª4,13,13ª1,14ª1
7700000000004900007
14ª2,14ª3,15,16ª1,16ª2,16ª2,16ª2áâà2
7700000000004900008
17ª1,17ª2,17ª2áâà2,17ª2áâà3,18ª1
7700000000004900009
18ª1áâà2,18ª2,18ª3,19,19ª2,20,20áâà2
7700000000004900010
20áâà3,21ª1,21ª1áâà2,21ª1áâà3,21ª1áâà4
7700000000004900011
21ª2,21ª2áâà2,22,23,25,25ª2,25ª2áâà2,27
7700000000004900012
3/2,5,7,9,11,15,17,17,17áâà1,21,21ª2
7700000000004910001
25,25áâà3,25áâà4,25,27,27ª2,27ª2áâà2
7700000000004910002
29áâà1,29ª1,29ª2,29ª2áâà2,29ª3,29ª4
7700000000004910003
29ª4áâà2
7700000000004910004
8,10,12,12ª3,14,16,16ª2,16ª3,18,18ª2
7700000000004910005
20,20áâà2,20áâà3,22
7700000000004910006
26,26áâà11,26áâà12,26áâà13,26áâà15
7700000000004910007
26áâà16,34ª1,34ª2,35/2ª1,35/2ª2,35/2ª3
7700000000004910008
35/2ª4,35/2ª4áâà2,36,36áâà2,37,37ª2,38
7700000000004910009
38áâà2,38áâà3,39ª1,39ª2,39ª2áâà3,40ª1
7700000000004910010
40ª2,41ª1,41ª2,42ª1,42ª2,44ª1,44ª2
7700000000004910011
44ª3,45,45áâà2,45ª2,46ª1,46ª2,46ª3
7700000000004910012
47ª1,47ª1áâà2,47ª2,47ª2áâà2,48,48áâà2
7700000000004910013
48áâà3,49,50,50áâà1,50áâà3,51,51áâà2
7700000000004910014
51áâà3,51áâà4,51áâà5,51áâà6,51áâà7
7700000000004910015
51áâà8,51áâà9,51áâà10,51áâà11,51áâà12
7700000000004910016
51áâà13,51áâà14,51áâà15,51áâà15
7700000000004910017
51áâà16,51áâà17,51áâà18,51áâà18
7700000000004910018
51áâà19,51áâà20,51áâà21,51áâà22
7700000000004910019
51áâà23,51áâà24,51áâà26,51áâà27
7700000000004910020
51áâà28,51áâà29,51áâà30,51áâà31
7700000000004910021
51áâà32,51áâà33,51áâà36,51áâà37
7700000000004910022
51áâà39,52áâà1,52áâà3,52áâà5,52áâà7
7700000000004910023
52áâà8,52áâà9,52áâà12,52áâà13,52
7700000000004910024
52áâà1,52áâà2,52áâà3,52áâà4
7700000000004910025
52áâà5,52áâà6,52áâà7,52áâà8,52
7700000000004910026
52áâà2,52áâà3,52áâà4,52áâà5
7700000000004910027
52áâà6,54,54áâà2,54áâà3,54áâà4,54áâà5
7700000000004910028
54áâà6,54áâà7,54áâà8,54áâà9,54áâà10
7700000000004910029
54áâà11,54áâà12,54áâà13,56,56áâà1
7700000000004910030
56áâà3,56áâà8,56áâà12,57,57áâà1,57áâà3
7700000000004910031
57áâà4,57áâà5,57áâà6,57áâà7,57áâà8
7700000000004910032
57áâà12,57áâà19,57áâà20,57áâà21
7700000000004910033
57áâà46,57,57,58áâà1,58áâà2,58áâà3
7700000000004910034
58áâà4,58áâà5,58áâà6,58áâà7,58áâà8
7700000000004910035
58áâà9,58áâà10,58áâà11,58áâà12,58áâà13
7700000000004910036
58áâà14,58áâà15,58áâà17,58áâà18
7700000000004910037
7700000000004910038
7700000000004910039
58áâà28,59,59áâà2,59áâà3,59áâà4,59áâà5
7700000000004910040
59áâà6,59áâà7,59áâà8,59áâà9,62,62áâà1
7700000000004910041
62áâà2
7700000000004910042
4ª1,4ª1áâà3,4ª2,4ª3,4ª3áâà2,4ª3áâà3
7700000000004920001
4ª4,6ª1,6ª2,6ª3,6
7700000000004920002
7700000000004920003
3ª1,3ª2,3ª2áâà3,3ª3,3ª5,3ª5áâà2
7700000000004920004
3ª5áâà3,3ª5áâà4,3ª6,5ª1,5ª2,5ª3
7700000000004920005
5ª3áâà2,5ª4,5ª4áâà2,5ª4áâà3,5ª5,17
7700000000004920006
17ª1,17ª1áâà2
7700000000004920007
18ª1,18ª2,18ª2áâà2,18ª3,18ª3áâà2,18ª3
7700000000004920008
115409
18ª4,18ª5,18ª5áâà2,18,20ª1,20ª1áâà3
7700000000004920009
20ª2,20ª3,20ª4,20ª4áâà2,20ª4áâà3,20ª5
7700000000004920010
20ª5áâà2,20ª6
7700000000004920011
2,8ª1,12ª1,12ª2,12ª2áâà3,56,57áâà2
7700000000004920012
57áâà3,58,58ª2,58áâà2,58áâà4,58áâà5
7700000000004920013
58áâà6,58áâà7,58áâà9,58áâà12,60,60
7700000000004920014
7,7ª1,7ª1áâà2,7ª1áâà3,9,11,13,13áâà2
7700000000004920015
15,15ª2,19,23,23áâà2,25,25ª2,27,27ª2
7700000000004920016
27ª2áâà2,29,29ª1,29ª1áâà2,29ª2,29,31
7700000000004920017
31ª2,31ª3,31ª3áâà2,31ª3áâà3,31ª4,31
7700000000004920018
33,33ª2,33ª2áâà2,35,35áâà2,37,37ª2,39
7700000000004920019
39áâà2,39áâà3,39áâà4,41,43,45,45áâà2
7700000000004920020
45áâà3,47,53ª1,53ª1áâà1,53,53áâà1
7700000000004920021
59áâà1,59áâà2,59áâà3,59áâà4,59áâà5,59
7700000000004920022
59áâà2,59áâà3,59áâà4,59áâà5,59,61
7700000000004920023
64,64áâà2,64áâà3,64áâà4,64áâà5,64áâà9
7700000000004920024
65,65áâà2,65áâà3,65áâà12,65áâà13,65áâà14
7700000000004920025
14,14ª2,16ª1,16ª1,16ª2,16ª2áâà2
7700000000004920026
115522
16ª2áâà3,16ª4,22ª1,22ª1áâà2,22ª2,22ª3
7700000000004920027
22ª3áâà2,22ª4,22ª5,22ª6
7700000000004920028
1,2,2,3,4,5,5áâà2,7áâà2,7ª1,7ª1áâà2,9
7700000000004930001
9áâà2,11,13,15,15ª2,17,19,19ª2,20,21
7700000000004930002
22,22,23,24,24áâà2,24áâà6,24áâà7,26
7700000000004930003
29,31ª1,31ª1áâà2,31ª2,33,35,35áâà2
7700000000004930004
35áâà3,37,39ª1,39ª2,41,41áâà2
7700000000004930005
2,2
7700000000004940001
2ª1,2ª1áâà2,2ª1áâà3,2ª1áâà4,2ª1áâà5
7700000000004940002
2ª2,2/1,4,6,8,8áâà2,10,10,12ª1
7700000000004940003
12ª1áâà2,12ª1áâà3,12ª1áâà4,12ª1áâà5
7700000000004940004
18ª1,18ª2,18,18áâà1,18áâà2,18áâà3
7700000000004940005
20ª1,20ª2,20ª2áâà2,20ª3,20ª3áâà3,22ª2
7700000000004940006
24ª1,24ª2,24ª3,24ª4,26ª1,26ª2,26ª3
7700000000004940007
28ª1,28ª2,28ª2áâà2,28ª3,28ª3áâà2
7700000000004940008
28ª3áâà3,28ª4,28,30ª1,30ª2,30ª3,30ª4
7700000000004940009
30ª5,30ª6,30ª6,30ª7,30ª8
7700000000004940010
13,13áâà1
7700000000004940011
32,32áâà2,34,36,36áâà2,36áâà3,36áâà4
7700000000004940012
36áâà5,36áâà6,36áâà7,36áâà8,36áâà9
7700000000004940013
36áâà10,36áâà11,36,36,36,36áâà2
7700000000004940014
36,36áâà1,36áâà2,36áâà4,36áâà5
7700000000004940015
36áâà6,36áâà7,36,38,40
7700000000004940016
10,10áâà2,10áâà5,10áâà6,10áâà7,10áâà11
7700000000004950001
10,10áâà1,25,25áâà2,25áâà3,25áâà4
7700000000004950002
25áâà5,25áâà6,25áâà7,25áâà8,25áâà9
7700000000004950003
25áâà10,25áâà11,25áâà12,25áâà13
7700000000004950004
25áâà14,25áâà15,25áâà16,25áâà17
7700000000004950005
25áâà18,25áâà19,25áâà21,25áâà22
7700000000004950006
25áâà24,25áâà25,25áâà26,25áâà27
7700000000004950007
25áâà28,25áâà30,25áâà33,25áâà36
7700000000004950008
25áâà37,25áâà39,25áâà40,27,27áâà2
7700000000004950009
27áâà3,27áâà4,27áâà5,27áâà6,27áâà7
7700000000004950010
27áâà8,27áâà9
7700000000004950011
1/1,1,1,1,2áâà1,2,3,5,5áâà2,7,8
7700000000004950012
8áâà3,8áâà4,8,8áâà2,8áâà1,8áâà2
7700000000004950013
8áâà3,9ª1,9ª1áâà2,9ª2,9ª3,11,11áâà2
7700000000004950014
13,13áâà2,13áâà3,13áâà4,17áâà1,17áâà2
7700000000004950015
7700000000004950016
17áâà9,17áâà10,17áâà11,17áâà12,17áâà13
7700000000004950017
17áâà15,17áâà17,17áâà18,17áâà19
7700000000004950018
17áâà20,17áâà21,17áâà22,17áâà23
7700000000004950019
17áâà24,17áâà25,17áâà26,17áâà28,19áâà1
7700000000004950020
7700000000004950021
19áâà7,19áâà10,19áâà11,19áâà12,21
7700000000004950022
21áâà2,21áâà3,21áâà4,21áâà5,21áâà6
7700000000004950023
21áâà7,21áâà8,21áâà9,21áâà10,21áâà11
7700000000004950024
21áâà12,21áâà13,21áâà14,21áâà15
7700000000004950025
21áâà16,21áâà21,21áâà22,21áâà23
7700000000004950026
21áâà24,21áâà25,21áâà26,23,23áâà2
7700000000004950027
23áâà3,23áâà4,23áâà5,23áâà7,23áâà8
7700000000004950028
23áâà9,23áâà10,23áâà13
7700000000004950029
16,16ª1,16ª1áâà1,16ª1áâà2,16ª1áâà3
7700000000004960001
16ª1áâà4,18,22ª2,22ª2áâà2,22ª3
7700000000004960002
22ª3áâà1,22ª3áâà2,22ª3áâà3,22ª3áâà4
7700000000004960003
22ª3áâà5,22ª3áâà6,22ª3áâà7,22ª3áâà8
7700000000004960004
22ª3áâà9,22ª3áâà10,22ª3áâà11,22ª3áâà12
7700000000004960005
22ª3áâà13,22ª3áâà14,22ª3áâà15
7700000000004960006
22ª3áâà16,22ª3áâà17,22ª3áâà32,22ª4
7700000000004960007
22ª4áâà1,22ª4áâà2,22ª4áâà3,22ª4áâà4
7700000000004960008
22ª4áâà5,22ª4áâà6,22ª4áâà7,22,22,22
7700000000004960009
22áâà1
7700000000004960010
51ª2,51ª3,51ª4,51ª5,51ª5áâà2,51ª6,53ª1
7700000000004960011
53ª1áâà2,53ª3,53ª3áâà2,53ª4,53ª5,53ª6
7700000000004960012
53ª7,55ª1,55ª2,55ª2áâà2,55ª3,55ª3áâà2
7700000000004960013
55ª4,55ª5,55ª6,55ª6áâà2,55ª6áâà3,55ª7
7700000000004960014
55ª8,55,57ª1,57ª1áâà1,57ª1áâà2
7700000000004960015
57ª1áâà3,57ª2,57ª3,57ª4,57ª5,57ª6,57ª7
7700000000004960016
57ª8,57,57,57,57,59ª1,59ª2
7700000000004960017
59ª2áâà2,59ª3,59ª4
7700000000004960018
7700000000004960019
7700000000004960020
1áâà13,1áâà14,1áâà15,1áâà16,1áâà17,1ª2
7700000000004960021
1ª2áâà2,1ª2áâà3,1ª2áâà4,1ª2áâà5,1,2ª1
7700000000004960022
2ª2,3ª1,3ª1áâà2,3ª1áâà4,3ª1áâà5
7700000000004960023
3ª1áâà8,3ª1áâà9,3ª1áâà10,3ª1áâà11
7700000000004960024
3ª1áâà22,3ª1áâà23,3ª1áâà24,3ª2áâà1
7700000000004960025
3ª2áâà2,3ª2áâà3,3ª2áâà4,3ª2áâà5
7700000000004960026
3ª2áâà6,3ª2áâà7,3ª2áâà8,3ª2áâà9
7700000000004960027
3ª2áâà10,3ª2áâà11,3ª2áâà12,3ª2áâà16
7700000000004960028
3ª2áâà17,4ª1,4ª1áâà1,4ª2,4ª3,4ª3áâà2
7700000000004960029
5ª1,5ª2áâà6,5ª2áâà7,6ª1,6ª2,7ª1,7ª2
7700000000004960030
7ª3,8ª1,8ª2,8ª3,8ª3áâà2,8ª4,8ª5,9ª1
7700000000004960031
9ª2,9ª3,9ª4,9,9áâà1,9áâà2,10ª1áâà1
7700000000004960032
10ª1áâà2,10ª2,10ª3,11ª1,11ª1áâà2,11ª2
7700000000004960033
11ª3,11ª4,11ª4áâà2,12,12áâà1,12áâà3
7700000000004960034
12áâà5,12,13ª1,13ª2,13ª3,13ª3áâà2,13
7700000000004960035
13áâà1,13áâà2,13áâà3,13áâà6
7700000000004960036
13áâà9,13áâà10,13áâà11,13áâà15
7700000000004960037
13áâà16,13áâà17,13áâà18,13áâà19
7700000000004960038
13áâà22,13áâà23,13áâà25,13áâà26
7700000000004960039
13áâà27,13áâà28,13áâà29,13áâà32
7700000000004960040
13áâà35,13áâà41,13,13áâà1,13
7700000000004960041
13áâà2,13áâà3,13áâà4,15,15áâà2,15ª2
7700000000004960042
15ª2áâà2,15ª2áâà3,15ª2áâà4,17ª5áâà1
7700000000004960043
17ª5áâà2,17ª5áâà3,17ª5áâà4,17ª5áâà5
7700000000004960044
19áâà1,19áâà2,19áâà3,19áâà4,19áâà5
7700000000004960045
19áâà6,19áâà7,19áâà8,19áâà9,19áâà10
7700000000004960046
19áâà11,19áâà13,19áâà14,19áâà15
7700000000004960047
19áâà16,19áâà17,19áâà18,19áâà19
7700000000004960048
19áâà20,19áâà21,19áâà22,19áâà23
7700000000004960049
31áâà45,31áâà46,31áâà71,31áâà78
7700000000004960050
31,31áâà2,31áâà3,31áâà4,31áâà5,31áâà6
7700000000004960051
31áâà7,31áâà8,31áâà9,31áâà9,31áâà10
7700000000004960052
31áâà11,31áâà12,31áâà13,31áâà14
7700000000004960053
31áâà15,31áâà16,31áâà17,31áâà19
7700000000004960054
31áâà20,31áâà21,31áâà22,31áâà23
7700000000004960055
31áâà24,31áâà25,31áâà26,31áâà27
7700000000004960056
31áâà28,31áâà29,31áâà30,31áâà31
7700000000004960057
7700000000004960058
31áâà36,31áâà37,31áâà37,31áâà38
7700000000004960059
31áâà39,31áâà40,31áâà42,31áâà44
7700000000004960060
31áâà90,33,33áâà24,33áâà48,33áâà50
7700000000004960061
33áâà52,33áâà55,33áâà57,33áâà58
7700000000004960062
33áâà62,33áâà87,33áâà88,33áâà89
7700000000004960063
33áâà91,33ª1,33ª1,33ª2,33ª3,33ª3
7700000000004960064
33ª4,33ª5,33ª6,33ª6,33ª7,33ª8,33ª9
7700000000004960065
33ª9,33ª9,33ª10,33ª10,33ª11,33ª12
7700000000004960066
33ª13,33ª14,33ª14,33ª15,33ª16,33ª17
7700000000004960067
33ª18,33ª19,33ª20,33ª21,33ª22,33ª23
7700000000004960068
33ª25,33ª26,33ª27,33ª28,33ª29,33ª30
7700000000004960069
33ª31,33ª32,33ª33,33ª34,33ª35,33ª36
7700000000004960070
33ª37,33ª38,33ª39,33ª40,33ª41,33ª42
7700000000004960071
33ª46,33ª51,33ª59,33ª63,33ª64,33ª65
7700000000004960072
33ª82,36,36,38,38ª2,39,39ª1,39áâà1
7700000000004960073
39áâà2,39áâà3,39áâà4,39áâà5
7700000000004960074
39áâà6,40,40áâà2,40ª2,41,41áâà2
7700000000004960075
41áâà3,41áâà4,41áâà5,41áâà6,41áâà7
7700000000004960076
41áâà8,41áâà9,41áâà10,41áâà11,42ª1
7700000000004960077
42ª1áâà1,42ª3,42,42áâà1,43ª1,43ª2
7700000000004960078
43ª2áâà2,43ª2áâà3,43ª2áâà4,43ª2áâà5
7700000000004960079
43ª3,43ª4,43ª5,44,44ª1,44ª2,44ª3,44ª4
7700000000004960080
44ª4áâà2,44ª4áâà3,44,45,45áâà2,45áâà3
7700000000004960081
45áâà4,45áâà5,45áâà8,45áâà9,45áâà10
7700000000004960082
45áâà11,45áâà12,45áâà21,45ª1,45ª1áâà2
7700000000004960083
45ª1áâà3,46ª1,46ª2,46ª3,46ª4,47,47áâà2
7700000000004960084
47áâà4,47áâà5,47áâà6,47áâà7,47áâà21
7700000000004960085
47áâà23,47áâà24,48ª1,48ª2,48ª3,49
7700000000004960086
49áâà4,49áâà10,49áâà11,49áâà22,49áâà24
7700000000004960087
49áâà61,49áâà74,49áâà80,49áâà82
7700000000004960088
49áâà84,49áâà87,49áâà88,49áâà90
7700000000004960089
49áâà91,49áâà99,49áâà101,49,49áâà2
7700000000004960090
50,50ª1,50ª2,50ª2,50ª3,50,50,52
7700000000004960091
52áâà1,52áâà2,52áâà5,54ª1,54ª2,54ª2
7700000000004960092
56ª1,56ª1áâà2,56ª2,58ª1,58ª2,58ª3,60ª1
7700000000004960093
60ª2,62/2,64ª1,64ª1áâà2,64ª1,66ª1
7700000000004960094
66ª1áâà1,66ª2,66ª3,68ª1,68ª2,70ª1,70ª2
7700000000004960095
70ª3,70ª3áâà3,72ª1,72ª2,72ª3,74ª1
7700000000004960096
74ª1áâà2,74ª1áâà3,74ª1áâà4,74ª1áâà5
7700000000004960097
74ª1áâà6,74ª3,76ª1,76ª1áâà1,76ª3
7700000000004960098
76ª3áâà2,76ª4,76ª7,78áâà1,78áâà2
7700000000004960099
78áâà3,78áâà4,78áâà5,78áâà6,78áâà7
7700000000004960100
78áâà8,78ª1,78ª1,78ª2,78ª2áâà2,78ª3
7700000000004960101
78ª3áâà2,78ª4,78ª5,78ª6,78ª6áâà2
7700000000004960102
78ª6áâà3,78ª6áâà4,78,78
7700000000004960103
31áâà43,31ª1áâà1,31ª1áâà2,31ª1áâà3
7700000000004960104
45296573000
31ª2,31ª2áâà2,31ª2áâà3,31ª2áâà4
7700000000004960105
19áâà24,19áâà25,19áâà26,19áâà27
7700000000004960106
19áâà28,19ª2
7700000000004960107
23ª1áâà2,23ª1áâà3,23ª1áâà4
7700000000004960108
115478
24,24áâà1,24áâà2,24áâà3,24áâà4,24áâà5
7700000000004960109
7700000000004960110
24áâà12,24áâà12,24áâà13,24áâà14
7700000000004960111
24áâà15,24áâà16,24áâà17,24áâà18
7700000000004960112
24áâà19,24áâà21,24áâà22,24áâà23
7700000000004960113
24áâà24,24áâà25,24áâà26,24áâà27
7700000000004960114
26ª1,26ª1áâà1,26ª2,26ª3,26,26,28ª1
7700000000004960115
28ª1áâà2,28ª2,28ª3,30,30ª1,32ª1,32ª2
7700000000004960116
32ª3,32ª3áâà2,32ª4,34,34áâà2,34áâà3
7700000000004960117
34áâà4,34áâà9,34áâà10,34,34áâà2
7700000000004960118
34áâà3,34áâà4,34áâà16
7700000000004960119
88/26,88/26áâà1,88/26áâà2,88/26áâà3
7700000000004960120
90ª1,90ª3,92ª1,92ª1áâà2,92ª3,92ª3áâà3
7700000000004960121
94ª1,94ª2,94ª2áâà1,94ª3,94ª3áâà2,94ª4
7700000000004960122
94ª5,94ª5áâà5,96ª1,96ª1áâà2,96ª2,98ª1
7700000000004960123
98ª1áâà2,98ª2,98ª3,100,102ª1,102ª1áâà3
7700000000004960124
102ª2,102ª2áâà2,104,106,106áâà2,106
7700000000004960125
106
7700000000004960126
7700000000004960127
80,80ª1,80ª1áâà2,80ª2,80ª2áâà2,80ª3
7700000000004960128
80,80,80áâà1,80áâà2,80áâà3,80
7700000000004960129
84ª1áâà2,84ª1áâà3,84ª2,86ª2,86ª3
7700000000004960130
86ª3áâà1,86ª3áâà2,86ª4,86
7700000000004960131
7700000000004960132
7700000000004960133
7700000000004960134
115446
80ª4,80,80,82,82áâà2,82,84ª1
7700000000004960135
7700000000004960136
23áâà7,23áâà10,23áâà11,23áâà12
7700000000004960137
áâà14,áâà15,23,25,25áâà1,25áâà2
7700000000004960138
61ª2,61ª3,61ª3,61ª4áâà1,61ª4áâà2
7700000000004960139
61ª4áâà3,61ª4áâà4,61ª4áâà5,61ª4áâà6
7700000000004960140
61ª4áâà7,61ª4áâà8,61ª4áâà9,61ª5,61/15
7700000000004960141
61,61áâà2,61áâà3,61áâà4,61áâà5
7700000000004960142
63ª1,63ª2áâà2,63ª2áâà3,63ª4áâà1
7700000000004960143
63ª4áâà2,108,108ª1,108ª1áâà1,108ª1áâà2
7700000000004960144
108ª2,108,110ª1,110ª2,110ª2áâà2
7700000000004960145
110ª2áâà4,110ª3,110ª4,110,112ª1,114ª1
7700000000004960146
116ª1,116ª1áâà2,116ª2,116ª2áâà2,116ª3
7700000000004960147
118ª1,118ª2,122,122áâà2,124ª1,124ª2
7700000000004960148
126,128,128ª2,130,132ª1,132ª1áâà1
7700000000004960149
132ª2,132ª3,132ª3áâà3,134,136,136áâà3
7700000000004960150
136,138,140,140áâà2,142ª1,142ª1áâà2
7700000000004960151
142ª1,142ª2,142ª3,142ª3áâà2,142ª3áâà3
7700000000004960152
144ª1,144ª2,144ª3,146ª1,146ª1áâà1
7700000000004960153
146ª1áâà2,146ª1áâà3,146ª2,146,148ª1
7700000000004960154
65,65áâà2,65áâà3,65áâà4,65áâà5,65áâà6
7700000000004960156
65áâà7,65áâà8,65áâà9,65ª1,65ª2,65,65
7700000000004960157
67,67áâà2,67áâà3,67áâà4,67áâà5,67áâà6
7700000000004960158
67áâà14,67áâà16,67ª1,67,69,69
7700000000004960159
4ª1,4ª1áâà2,4ª2,6ª1,6ª1áâà2,6ª2,6ª3
7700000000004970001
8ª1,8ª2,8ª3,10ª1,10ª1áâà2,10ª2
7700000000004970002
10ª2áâà2,10ª3,10ª3áâà3,10ª4,12ª1,14ª1
7700000000004970003
16/29,18,18,20,22ª1,22ª1áâà2,22ª2
7700000000004970004
1ª1,1ª11,1ª16,1ª17,1ª19,1,4,4áâà2
7700000000004980001
4áâà3,4áâà4,4áâà6,4áâà7,4áâà8,4áâà9
7700000000004980002
7700000000004980003
4áâà15,4áâà16,4áâà20,4áâà23,6ª1,8ª1
7700000000004980004
8ª2,8ª2áâà7,8ª3,8ª3áâà6,8ª4,8ª5,10,10
7700000000004980005
12ª1,13,13áâà2,13áâà3,13áâà4,14
7700000000004980006
14áâà2,14ª1,14ª1áâà2,14ª1áâà3,14ª2,16
7700000000004980007
16,17
7700000000004980008
21,21áâà1
7700000000004980009
115487
3,7,23ª1,23ª2,23ª3,25ª1,25ª2,25ª3
7700000000004980010
25ª3áâà4,27ª1,27ª2,27ª3
7700000000004980011
7700000000004990001
3,4,5,5áâà3,5áâà4,5áâà5,5áâà7,5áâà8
7700000000004990003
7700000000004990004
5áâà14,5áâà17,5áâà18,6,6áâà2,6áâà3,7,9
7700000000004990005
10ª1,10ª1áâà2,10ª1áâà3,10ª2,10ª2áâà2
7700000000004990006
10ª2áâà4,11ª1,11ª2,12ª1,12ª1áâà2,12ª2
7700000000004990007
12ª3,12ª3áâà3,12,13ª1,13ª1áâà2
7700000000004990008
13ª1áâà3,13ª2,14,17ª1,19ª1,19ª1áâà2
7700000000004990009
19ª2,21,21
7700000000004990010
5áâà2
7700000000004990002
2ª1,2ª2,2ª3,4ª1,4ª2,6,6ª2,6ª3,6ª3áâà2
7700000000005000001
8ª1,8ª1áâà2,8ª1áâà3,8ª1áâà4,8ª2
7700000000005000002
8ª2áâà2,8ª2áâà3,8ª3,10ª1,10ª2,10ª3
7700000000005000003
12ª2,12ª2áâà2,14ª1,14ª1áâà2,14ª1áâà3
7700000000005000004
14ª2,14ª3
7700000000005000005
3ª1,3ª2,3,5ª1,5ª1áâà2,5ª2,5ª3,5ª3áâà2
7700000000005000006
5ª4,7ª1,7ª2,7ª3,7ª4,7ª4áâà2,9ª1
7700000000005000007
9ª1áâà2,9ª1áâà3,9ª2,11ª1,11ª2,11ª2áâà2
7700000000005000008
9,10,10áâà2,11,11áâà2,12ª1,12ª1áâà2
7700000000005010001
12ª2,13,14áâà3,14ª1,14ª1áâà2,14ª1áâà3
7700000000005010002
14ª1áâà4,14ª2,14ª3,14ª4,15ª1,15ª2,16
7700000000005010003
17,17ª1,17ª1áâà2,17ª1áâà3,17ª2,17ª3,18
7700000000005010004
19,19ª1,21,23,23áâà2,23áâà3,23áâà4
7700000000005010005
3,3áâà2,3áâà3,3áâà4,3áâà10,3áâà11
7700000000005010006
3áâà14,3áâà15,3,4,4
7700000000005010007
22ª1,22ª1áâà4,22ª2,22ª3,22ª4,24ª1,24ª2
7700000000005010008
24ª3,24ª4,26ª2,26ª3,26ª4,28ª1,28ª1áâà2
7700000000005010009
28ª2,29,30,30áâà2,31,32,32áâà2,36ª1
7700000000005010010
36ª1áâà2,38,38áâà2,38áâà3
7700000000005010011
34/25,36/20,36/20áâà2,38,40,40áâà2,44
7700000000005020001
44áâà1,46áâà2,46ª1,46ª1áâà1,46ª1áâà2
7700000000005020002
46ª1áâà4,46
7700000000005020003
áâà1,áâà2,2ª8,2ª10,2ª10,2ª12áâà2,2ª13
7700000000005020004
2ª15,2/16,2,3ª1,3ª2,3ª2áâà2,3ª2áâà8
7700000000005020005
3ª2áâà9,3ª2áâà10,3ª2áâà11,3ª2áâà13
7700000000005020006
3ª2áâà14,3ª2áâà15,3ª4,4ª1,6ª1,6ª2,8
7700000000005020007
8áâà2,8ª2,10áâà4,10ª1,10ª1áâà3
7700000000005020008
10ª1áâà4,10ª2,10ª3,12ª1,12ª2,12ª2áâà2
7700000000005020009
14ª1,14ª1áâà2,14ª2,16/14,16/14áâà3
7700000000005020010
16/14ª1,18,19,19,20,20áâà2,20ª2,22
7700000000005020011
22áâà1,22ª1,22ª1áâà2,22ª2,24ª1,24ª2,26
7700000000005020012
26áâà2,28,28áâà2,30,32
7700000000005020013
5,5áâà2,5áâà3,5áâà4,5áâà5,5,5
7700000000005020014
5,7,7ª1,7ª2,7ª3,7,9,11ª1,11ª2,13
7700000000005020015
13áâà2,13áâà3,13ª2,15ª1,15ª1áâà2,15ª2
7700000000005020016
15ª2áâà2,17áâà2,17ª1,17ª1áâà2,17ª1áâà3
7700000000005020017
23,23ª1,50,50áâà2,52,52ª1,52,54/21
7700000000005020018
54/21áâà2,54/21áâà3
7700000000005020019
3,3áâà2,3
7700000000005030001
1,1áâà2,3ª1,3ª1áâà2,3ª2,3ª2áâà3,5,7ª1
7700000000005040001
7ª1áâà2,7ª2,9áâà1,9áâà2,9áâà3,9áâà4,9
7700000000005040002
11,11áâà5,13,15,15áâà2,15
7700000000005040003
4ª1,4ª1áâà3,4ª1áâà4,4ª2,8,10,10áâà2
7700000000005040004
10áâà3,10,12,12
7700000000005040005
1/1ª1,1/1ª2,1/1ª3,3,3áâà2,4,5,6,6áâà2
7700000000005050001
7,8,8,9,10,10áâà2,11,11áâà2,12,13,14
7700000000005050002
14ª2,14ª2áâà2,15,16,18,18ª2,20,22ª1
7700000000005050003
22ª1,22ª3,24,24áâà2,26ª1,26ª2,26ª3
7700000000005050004
28ª1,28ª2,28ª3,28ª4
7700000000005050005
14ª1,14ª1áâà2,14ª2,16,16áâà2,16áâà3,18
7700000000005060001
18áâà2,18áâà3,19,19ª2,20,20áâà2,20áâà3
7700000000005060002
20áâà4,20áâà5,21,21áâà3,22,23,25,27,31
7700000000005060003
31áâà2,31áâà3,31ª2,31ª3,31,33ª1,35ª2
7700000000005060004
35ª3,35ª3áâà7,35ª4,35ª5,35ª6,37
7700000000005060005
1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà6,1áâà7
7700000000005060006
1áâà8,3,3áâà2,7ª1,7ª1áâà2,7ª2,11,13ª1
7700000000005060007
13ª1áâà2,13ª2,13ª2áâà3,13,15,17
7700000000005060008
17áâà2,17
7700000000005060009
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000005070001
2áâà6,2áâà7,2áâà8,2áâà9,2,2áâà2
7700000000005070002
2áâà3,3áâà1,3áâà2,3áâà3,3áâà4,3áâà10
7700000000005070003
3áâà11,3áâà14,3áâà15,4,4,5ª1,5ª1áâà2
7700000000005070004
5ª2,6,7ª1,7ª1áâà2,7ª1áâà3,7ª2,7ª2áâà1
7700000000005070005
9áâà1,9ª1,9,9,11ª1,13áâà2,13ª1
7700000000005070006
13ª1áâà2,15,15ª2,17,17áâà2,19ª1,19ª2
7700000000005070007
19ª2áâà2,21áâà1,21áâà2,21áâà3,21ª1áâà1
7700000000005070008
7700000000005070009
4,4áâà3,4ª1,4ª2,6,6ª1,6ª2,8ª1,8ª1áâà2
7700000000005080001
8ª2,8ª2,8ª4,10,10ª2
7700000000005080002
16,16áâà2,16áâà3,16áâà4,16áâà5,16áâà6
7700000000005090001
16áâà7,16áâà9,16áâà10,16áâà11,16áâà12
7700000000005090002
20,20áâà2,20áâà3,20áâà4,20áâà5,20áâà6
7700000000005090003
20áâà7,20áâà8,31ª1,31ª1áâà2,31ª2,31
7700000000005090004
31,33,35ª1,35ª2,35ª2áâà2,35ª3,37ª1
7700000000005090005
37ª2,39,41ª1,41ª2,43,45ª1,45ª2,47ª1
7700000000005090006
47ª2,49,51ª1,51ª2,53ª2,55ª1,55ª1áâà2
7700000000005090007
55ª2,57/8
7700000000005090008
1,1áâà2,1áâà3,1áâà6,3,5áâà2
7700000000005090009
2áâà1,2áâà2,2áâà3,2áâà5,2áâà6,2ª1
7700000000005090010
2ª1áâà2,2ª2,2ª2áâà2,2,2áâà2,4ª1,4ª2
7700000000005090011
4ª3,4ª4,4ª5,4ª5áâà2,4ª6,4ª6áâà2,4,6
7700000000005090012
6áâà3,7,7áâà2,7áâà3,7áâà4,7áâà5,7áâà6
7700000000005090013
7700000000005090014
7áâà13,7áâà14,8,8áâà2,8áâà3,8áâà4
7700000000005090015
8áâà5,8áâà6,9ª1,9ª1áâà2,9ª2,10,11,12
7700000000005090016
12áâà1,12áâà2,12áâà4,12áâà7,12áâà8
7700000000005090017
12áâà23,12áâà24,13,14,14áâà2,14ª2áâà2
7700000000005090018
14,14áâà2,14áâà4,14áâà5,14áâà6
7700000000005090019
14áâà7,14áâà8,14áâà9,15,17,19ª1
7700000000005090020
19ª2,19ª2áâà2,19ª3,19ª3áâà2,19ª4,21ª2,23
7700000000005090021
2,2áâà1,2áâà6,2ª2,2ª3,2ª4,2,4ª1,4ª2
7700000000005100001
4ª2áâà4,4ª3,4áâà1,4áâà2,4áâà3
7700000000005100002
4áâà4,4áâà5,4áâà8,4áâà9,4áâà10
7700000000005100003
4áâà11,4áâà12,4áâà1,4áâà2,4áâà3
7700000000005100004
4áâà4,4áâà5,4
7700000000005100005
12áâà1,12áâà2,12áâà4,12áâà5,12áâà6
7700000000005100006
12áâà7,12áâà8,12áâà9,12áâà10,12áâà11
7700000000005100007
12áâà12,12áâà13,12áâà15,12áâà16
7700000000005100008
12áâà17,12áâà18,12áâà19,12áâà20
7700000000005100009
12áâà21,12áâà22,12áâà23,12,12áâà2
7700000000005100010
12áâà3,12áâà4,12áâà5,12,12áâà2
7700000000005100011
12áâà3,12áâà4,12áâà5,14áâà1
7700000000005100012
14áâà2,14áâà3,16,16áâà2,16áâà3
7700000000005100013
16áâà4,16áâà5,16áâà6,16áâà7,16áâà9
7700000000005100014
16áâà10,16ª1áâà1,16ª1áâà2,16ª1áâà3
7700000000005100015
16ª1áâà5,16ª2,16,16ª,16ª,16áâà2
7700000000005100016
16áâà5,16áâà6,16áâà7,16áâà8
7700000000005100017
16áâà11,16áâà12,16áâà13,16áâà14
7700000000005100018
16áâà17,16áâà18,16áâà20,16áâà24
7700000000005100019
16áâà27,16áâà28,16áâà29,16áâà31
7700000000005100020
16áâà38,16áâà40,16áâà42,16áâà43
7700000000005100021
16áâà43,16áâà45,16áâà46,16áâà47
7700000000005100022
16áâà48,16áâà50,16áâà51,16áâà55
7700000000005100023
16áâà56,16áâà57,16áâà58,16áâà59
7700000000005100024
16áâà60,16áâà61,16áâà62,16áâà62
7700000000005100025
16áâà63,16áâà64,16áâà65,16áâà66
7700000000005100026
16áâà67,16áâà68,16áâà69,16áâà72
7700000000005100027
16áâà74,16áâà75,16áâà79,16áâà81
7700000000005100028
16áâà82,16áâà82,16áâà84,16áâà85
7700000000005100029
16áâà87,16áâà89,16áâà91,16áâà96
7700000000005100030
16áâà97,16áâà98,16áâà99,16áâà101
7700000000005100031
16áâà121,16áâà122,16áâà123
7700000000005100032
16áâà126,16áâà127,16áâà128
7700000000005100033
16áâà133,16áâà134,16áâà135
7700000000005100034
16áâà136,16áâà138,16áâà143
7700000000005100035
16áâà117,16áâà118,16áâà119
7700000000005100036
16áâà146,16áâà149,16áâà151
7700000000005100037
16áâà158,16áâà168,16áâà176
7700000000005100038
16áâà177,16áâà182,16áâà183
7700000000005100039
16áâà194,16áâà198,16áâà211
7700000000005100040
16áâà211,16áâà240,16áâà240
7700000000005100041
18,20,20áâà2,22ª1,22ª2,24,26,26áâà2
7700000000005100042
26ª2,26,28,28ª2,28ª3,30,32,34,34áâà2
7700000000005100043
7700000000005100044
5,5áâà2,5áâà3,5áâà4,6,6áâà1,6áâà2
7700000000005100045
115533
6áâà3,6áâà4,6áâà5,6áâà6,6áâà7
7700000000005100046
6áâà8,6áâà9,6áâà10,8,10,10áâà1
7700000000005100047
10áâà2,10áâà3,10áâà4,10áâà10
7700000000005100048
9ª1,9ª2,9ª2áâà2,9ª3,11ª1,11ª2,11ª3
7700000000005100049
11ª3áâà2,13ª1,13ª2,13ª2áâà2,13ª3,15ª1
7700000000005100050
15ª2,15ª3,15ª3áâà2,17áâà2,17ª1
7700000000005100051
17ª1áâà2,19,19,19áâà1,19áâà3,21ª1
7700000000005100052
21ª2,23áâà1,23áâà2,23áâà3,25,25áâà1
7700000000005100053
25áâà2,27,27ª2,27ª3,27ª4,29ª1,29ª2
7700000000005100054
29ª3,29ª3áâà5,29ª4,29,31,33,33ª2,35ª1
7700000000005100055
35ª2,35ª3,35ª3áâà2,35ª3áâà5,35ª3áâà5
7700000000005100056
35ª3áâà6,35ª3áâà7
7700000000005100057
7700000000005100058
1áâà9,1áâà10,1áâà14,1áâà15,1áâà16
7700000000005100059
1áâà17,1áâà19,1áâà21,1áâà22,1áâà23
7700000000005100060
1áâà24,1áâà25,1áâà26,1áâà28,1áâà30
7700000000005100061
1áâà33,1áâà34,1áâà36,1áâà40,1áâà41
7700000000005100062
1áâà42,1áâà44,1,3,3áâà2,3áâà3
7700000000005100063
3áâà4,3áâà5,3áâà6,3áâà7,3áâà8
7700000000005100064
3áâà10,3áâà11,3áâà12,3áâà13
7700000000005100065
3áâà14,3áâà15
7700000000005100066
8áâà1,8áâà2,8áâà5,8áâà6,8áâà7,8áâà9,8ª1
7700000000005110001
105005
5ª2,10,10áâà2,10áâà3,10áâà4,10áâà5,12
7700000000005110002
12áâà2,12áâà3,12áâà4,12áâà5,12áâà6,13
7700000000005110003
13áâà2,13áâà3,13áâà4,13áâà5,13áâà6
7700000000005110004
13áâà7,13áâà8,13áâà9,13áâà10,14,15
7700000000005110005
15áâà1,15áâà2,15áâà4,16,16áâà1
7700000000005110006
1,1ª1,1ª2,1ª3,1ª3áâà3,1ª4,5ª1
7700000000005110007
2,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6,2áâà7
7700000000005110010
7700000000005110011
2áâà29,2áâà30,2áâà31,2áâà32,2áâà33
7700000000005110012
2áâà34,4,4áâà2,6áâà1
7700000000005110013
6,6áâà2,8,8áâà1,8áâà3,8áâà4,8áâà5
7700000000005120001
7700000000005120002
2áâà7,2áâà8,2áâà10,4,4áâà1,4áâà2,4áâà3
7700000000005120003
4áâà4,4,4áâà2,4áâà3,6,6áâà2,6áâà3
7700000000005120004
6áâà4,6áâà5,6áâà6,6áâà7,6áâà8,6áâà10
7700000000005120005
6áâà11,6áâà13,6áâà14,6áâà15,6áâà16,6
7700000000005120006
6áâà2,6áâà3,6áâà4,6áâà5,6áâà6
7700000000005120007
6áâà7,6áâà8,6áâà9,6áâà10,6áâà11
7700000000005120008
6áâà18,6áâà19,6áâà20,6áâà21,6áâà4
7700000000005120009
6áâà6
7700000000005120010
3,5,5áâà2,5ª2,5ª3,7áâà5,7ª1,7ª1áâà2
7700000000005130001
7ª1áâà3,7ª1áâà4,7ª1áâà5,7ª1,7ª2,7ª3,9
7700000000005130002
11ª1,11ª1áâà2,11ª3,13
7700000000005130003
15,15áâà1,15áâà2,15áâà3,15,21ª1
7700000000005130004
21ª1áâà2,21ª1áâà3,21ª1áâà4,21ª2,23ª1
7700000000005130005
23ª2,23ª3,25,25áâà2,25áâà3
7700000000005130006
22,22áâà2,22áâà3,22áâà4,22áâà5,22
7700000000005130009
22áâà2,22áâà3,22,22,24,24áâà1
7700000000005130010
24áâà1,24áâà2,24áâà3,24ª1,24ª1
7700000000005130011
24ª2áâà1,24ª2áâà2,24ª2áâà3,24ª2áâà5
7700000000005130012
24ª2áâà6,24ª2áâà8,24ª2áâà9,24ª2áâà12
7700000000005130013
43,43,43,45,45áâà2,45ª1,47/33
7700000000005130014
47/33áâà4,47/33,47,49ª1,49ª1áâà2
7700000000005130015
49ª2,49ª2áâà2,49ª3,49,49,51,51ª2,51
7700000000005130016
53,53ª2,53,55ª1,55/16,57,57
7700000000005130017
4,6,8,8,10ª1,10ª2,10ª2áâà2,10ª2áâà3
7700000000005130018
10ª2áâà4,12ª1,12ª2,12ª2áâà2,12ª2áâà3
7700000000005130019
12ª2áâà4,12ª2,12,14ª1,14ª1,14ª2
7700000000005130020
14ª2áâà2,14ª2áâà3,14ª3,14ª3áâà3
7700000000005130021
14ª3áâà4,14ª3áâà5,14,14,14
7700000000005130022
16,18,18áâà2,18ª2,18ª2áâà2,20/2
7700000000005130023
30áâà1,30áâà2,30áâà3,30áâà4
7700000000005130024
30áâà5,30áâà6
7700000000005130025
24ª2,24ª2,24ª3,24ª3,24ª4,27ª1,29/49
7700000000005130026
31,31áâà2,31,33,33,35ª1,35ª1áâà2
7700000000005130027
35ª2,35ª2áâà2,35ª2áâà3,35ª3,37ª1,37ª2
7700000000005130028
37ª2,37ª3,37ª3áâà2,37ª4,39ª1,39ª2
7700000000005130029
39ª2áâà2,39ª3,41,41áâà2,41áâà3
7700000000005130030
24áâà3,24áâà4,26ª2,26ª2,26ª3
7700000000005130031
26ª3áâà2,26ª3áâà3,26ª3áâà5,26ª3,28
7700000000005130032
28áâà2,28áâà3,28áâà4,28áâà5,28áâà6
7700000000005130033
28áâà7,28áâà8,28áâà22,28áâà23,28áâà24
7700000000005130034
28áâà25,28áâà26,28,30,30áâà2
7700000000005130035
30áâà3,30áâà9,30áâà10,30áâà11,59
7700000000005130036
59ª1,59ª1áâà2,59ª1áâà3,59ª2,59ª3,59
7700000000005130037
15,15,15,15
7700000000005130007
áâà1,áâà2,áâà3,24ª2áâà4,24,24áâà2
7700000000005130008
9,9áâà2,9áâà3,11,13ª2,13ª3,13ª3áâà2
7700000000005140001
13ª4,13ª5,14,15,15,16áâà1,16,17ª1
7700000000005140002
17ª2,19,19áâà2,19áâà3,21ª1,23ª1,26áâà1
7700000000005140003
29ª1,29ª2,31,31áâà2,31áâà3,33,33áâà2
7700000000005140004
33áâà3,35ª1,35ª1áâà2,35ª2,35ª3
7700000000005140005
35ª3áâà3,37ª1,37ª2,37ª3,39ª1,39ª1áâà2
7700000000005140006
39ª1áâà3,39ª2,39ª2áâà2,39ª2áâà3,39,41
7700000000005140007
41áâà2,43ª2,43ª2áâà2,43ª2áâà3,43,45ª1
7700000000005140008
3,5ª1,5ª2,5ª3,7ª1,7ª1áâà2,7ª1áâà4,7ª2
7700000000005150001
7ª2áâà2,7ª3,7ª3áâà2,7ª5,9ª1,9ª2,9ª4
7700000000005150002
11/31,11/31áâà2
7700000000005150003
3,4,5,6,6áâà2,7,8,8áâà2,10
7700000000005160001
3,3áâà1,3áâà2,3áâà3,3áâà6,3,3áâà2
7700000000005180001
7700000000005180002
4áâà7,4áâà8,4áâà9,4áâà10,4áâà12,4áâà13
7700000000005180003
4áâà14,4áâà15,4áâà16,4áâà17,4áâà18
7700000000005180004
7700000000005180005
4áâà1,5,5áâà2,5áâà3,5áâà4,6áâà2,6
7700000000005180006
8,9,9áâà1,9áâà2,10,10áâà2,10áâà3
7700000000005180007
10,10áâà1,10áâà3,10áâà5,10áâà6,14
7700000000005180008
6,8,9,9áâà2,9áâà3,9áâà4,9áâà5,9áâà6
7700000000005180010
9áâà7,9áâà8,9áâà9,9áâà10,9áâà11,11
7700000000005180011
11áâà2,11áâà3,11áâà4,11áâà6,11áâà7
7700000000005180012
11áâà8,11áâà9,11áâà10,11áâà12,11áâà15
7700000000005180013
11áâà16,11áâà17,11áâà21,11áâà22
7700000000005180014
11áâà1,11áâà4,11áâà6,11áâà9
7700000000005180015
11áâà16,11áâà18,11áâà19,11áâà20
7700000000005180016
11áâà21,11áâà22,11áâà38,11áâà41
7700000000005180017
11áâà42,11áâà43,11áâà44,11áâà45
7700000000005180018
11áâà46,11áâà47
7700000000005180019
1,1áâà2,5,8,8,18,18áâà2,28,28áâà2
7700000000005190001
28áâà3,28áâà4,30,30áâà3,30áâà4,30áâà6
7700000000005190002
áâà1,1,2,2,2áâà2,4,4áâà2,5,6,6áâà1
7700000000005200001
115406
6áâà2,6áâà3,6áâà4,7,8,8áâà2,8áâà3,9,10
7700000000005200002
10ª3,10ª8,10,10,10,11,12,13,14,15
7700000000005200003
16,17,18,21,22,23,25,27,29,30,35,36,42
7700000000005200004
43,44,45,46,50,51,52,53,54,57,59,63,65
7700000000005200005
71,72,73,75,77,78,82
7700000000005200006
3,3ª2,3áâà1,4,4áâà2,4áâà3,4áâà4,4ª2
7700000000005210001
5ª1,5ª2,6,7ª1,7ª2,8,9ª1,9ª1áâà2,9ª2
7700000000005210002
9ª3,10,11,11áâà2,11áâà3,12,13ª1
7700000000005210003
13ª1áâà2,13ª1áâà4,13ª2,13ª2áâà2,15ª1
7700000000005210004
15ª1áâà2,17,17áâà2,19ª1,19ª2,19ª3,21ª1
7700000000005210005
21ª2,21ª3,23,23áâà2,23_25,25/31
7700000000005210006
25/31áâà2,25áâà7,29,29áâà1,29áâà2
7700000000005210007
29áâà4,29áâà5,29áâà6,29,29áâà2
7700000000005210008
29áâà3,29áâà4,29áâà5,29áâà6,38
7700000000005210009
46ª1,46ª2,46ª3,46ª4,48ª1,48ª2,48,50ª1
7700000000005210010
50ª1áâà2,52ª1,52ª2,52ª2áâà2,52ª2áâà3
7700000000005210011
54,54ª1,56ª1,56ª2,56ª3,56ª3áâà2,58
7700000000005210012
58áâà2,60,62,62áâà2,62áâà3,62áâà4
7700000000005210013
1,2ª1,3,6
7700000000005220001
2,2ª1áâà1,2ª1áâà2,2ª2,2ª4,2ª5,2ª6
7700000000005230001
2ª6áâà2,2ª7,2ª10,2ª10áâà2,2ª11,2ª12
7700000000005230002
2ª13,2ª13áâà1,2ª13áâà2,4ª1,4ª1,4ª2
7700000000005230003
4ª2,4ª3,4ª10,4ª10áâà1,4ª10áâà2
7700000000005230004
4ª10áâà3,4ª10áâà4,4ª10áâà5,4ª10áâà6
7700000000005230005
4ª10áâà7,4ª10áâà8,4ª10áâà10,4ª10áâà11
7700000000005230006
4ª10áâà12,4ª10áâà13,4ª10áâà14,4ª11,4
7700000000005230007
4áâà2,4áâà3,4áâà4,4áâà6,4áâà7
7700000000005230008
4áâà8,4áâà10,4áâà11,4áâà12,4áâà13
7700000000005230009
4áâà14,4áâà16,4áâà17,4áâà18
7700000000005230010
4áâà19,4áâà20,4áâà22,4áâà30
7700000000005230011
4áâà36,4áâà40,4áâà41,4áâà42
7700000000005230012
4áâà43,4áâà44,4,4áâà2,4áâà4
7700000000005230013
4áâà7,4
7700000000005230014
1,1áâà2,1áâà3,3/13,4,5,8,8ª1,8ª1áâà3
7700000000005240001
10,10ª2,10ª3,10ª4
7700000000005240002
3,3áâà1,3áâà2,3ª2,5,5áâà1,5áâà2,5áâà3
7700000000005250001
7,7áâà2,7áâà3,7áâà4,7áâà5,9,34/36
7700000000005250002
2,2,6
7700000000005260001
1,1áâà2,1áâà3,2,4,4áâà1
7700000000005270001
7700000000005280001
7áâà8,7áâà9,7áâà10,7áâà11,7,7áâà2
7700000000005280002
18,18áâà2,18ª2,20,22
7700000000005290001
23,23ª1,23ª1áâà2,23ª2,23ª2áâà4,25
7700000000005290002
25áâà2,25ª1,25ª1áâà1,25ª1áâà2,25ª1áâà3
7700000000005290003
25ª1áâà4,25ª1áâà5,25ª2,25,27ª2,29ª2
7700000000005290004
29ª2áâà2,29ª2áâà3,29ª2áâà4,32,34ª1
7700000000005290005
34ª1áâà2,34ª2,34ª2áâà3,34ª2áâà4,36ª2
7700000000005290006
36ª2áâà3,36ª2áâà4,36,38,42/30
7700000000005290007
42/30áâà2,42/30áâà3
7700000000005290008
1,3,3áâà2,4,5áâà2,5ª1,5ª1áâà2,6ª1,6ª1
7700000000005290009
6ª2,6ª2áâà2,6ª2áâà3,6ª3,6ª3áâà2
7700000000005290010
6ª3áâà3,7,8ª1,8ª2,9,9áâà2,9ª2,10,10ª2
7700000000005290011
11ª1,11ª1áâà3,11ª1áâà4,11ª2,12,13
7700000000005290012
13áâà2,13ª2,13,14,14áâà2,14áâà3,15
7700000000005290013
17ª1,17ª1áâà2,17ª1áâà3,17ª1áâà4,17ª2
7700000000005290014
17ª3
7700000000005290015
37ª1,37ª2,39ª2,39ª2áâà2,39ª2áâà4,39ª3
7700000000005290016
39ª3áâà2,39,41ª1,41ª2,41ª3,43,44/27
7700000000005290017
44/27áâà2,44,44,46ª1,46ª1áâà2
7700000000005290018
46ª1áâà3,46ª2,46ª3,48ª1,48ª1áâà2,48ª2
7700000000005290019
48ª2,50,50ª1,50ª1áâà2,50ª2,50ª2áâà2
7700000000005290020
50ª2áâà3,50ª2áâà4,50ª3,50ª3áâà1,50ª4
7700000000005290021
50,52,54ª1,54ª1áâà2,54ª2,54ª2áâà3
7700000000005290022
51,51áâà2,53,53áâà2,53áâà3,53ª2,55ª1
7700000000005290023
55ª2,55ª2áâà2,57,58ª1,58ª1áâà2,58ª2
7700000000005290024
58ª3,58ª3áâà2,58ª3áâà3,59ª1,59ª2
7700000000005290025
59ª2áâà2,60ª1,60ª1áâà2,60ª1áâà3
7700000000005290026
45,62/1,62/1áâà3,62/1áâà4,62/1áâà5,62
7700000000005290027
64ª1,64ª2
7700000000005290028
28,28,28áâà1,28áâà2,28áâà3,28,40
7700000000005290029
40ª2,40ª2áâà2
7700000000005290030
39áâà1,39áâà2,39áâà3,39áâà4,39áâà5
7700000000005300001
39áâà6,39ª1,39ª2,39ª3,39ª3,41ª1
7700000000005300002
41ª1áâà2,41ª2,41ª3,41ª4,41ª4áâà2,43ª1
7700000000005300003
43ª2,43ª3,43ª4,43ª4áâà2,43ª4áâà3,43ª5
7700000000005300004
43áâà1,43áâà2,45ª1,45ª1áâà2,47,49/1
7700000000005300005
49/1áâà2
7700000000005300006
12,14,14,31,31áâà2,31áâà3,31áâà4
7700000000005300007
31áâà5,31áâà6,37ª1,37ª2
7700000000005300008
30,30
7700000000005300009
8,8áâà2,8áâà3,8áâà4,8áâà5,8áâà6,8áâà7
7700000000005300010
8áâà8,29
7700000000005300012
áâà11,28áâà1,28áâà2,30,53/2,55,55áâà2
7700000000005300013
55áâà3,57,57ª1,57ª1,57ª1,57ª2,59ª1
7700000000005300014
59ª2,59ª2áâà2,59ª3,59ª3áâà2,59ª3áâà3
7700000000005300015
59ª3áâà4,59ª3áâà5,61ª1,61ª2,61ª2áâà2
7700000000005300016
61ª2áâà3,61ª3,63ª1,63ª1áâà2,65,65áâà2
7700000000005300017
65ª1,67ª1,67ª1áâà2,67ª2,69,69ª2,71
7700000000005300018
22,22áâà1,22áâà3
7700000000005300019
1áâà1,1áâà2,1,1áâà1,1áâà2,1áâà3
7700000000005310001
1áâà4,1áâà5,1áâà6,1,1áâà1,1áâà2
7700000000005310002
3,4,4ª2,6ª1,6ª2,6ª3,6ª4,8,8ª2,8ª3,8ª4
7700000000005310003
8ª4,8,10,10áâà2,10ª1,10ª1áâà2
7700000000005310004
10ª1áâà3,11,12ª1,12ª1áâà2,12ª2,13,14
7700000000005310005
14áâà2,14áâà3,14áâà4,19,19áâà2,21,21ª1
7700000000005310006
21ª1áâà2
7700000000005310007
8ª1áâà3,8ª2,10ª1,10ª2,13,13áâà1,13áâà2
7700000000005320001
14,14áâà2,14
7700000000005320002
7700000000005320003
4,4áâà2,6,6áâà2,6,8,8ª1,8ª1áâà2
7700000000005320004
14áâà1,14áâà11
7700000000005320005
14áâà7,14áâà8,17,17áâà2,17áâà4,17
7700000000005320006
19ª1,19ª2,19ª3,21ª1,21ª2,21ª3,23ª1
7700000000005320008
23ª1áâà2,23ª1áâà3,23ª2,26,27/25
7700000000005320009
27/25áâà2,27/25áâà3,28,28áâà2,28áâà5
7700000000005320010
29,30,30áâà2,30áâà3,30,30,30áâà1
7700000000005320011
7700000000005320012
13,32ª1,32ª2,32ª2áâà2,32ª3,33ª1
7700000000005320013
33ª1áâà2,33ª1áâà3,33ª2,34,34áâà2
7700000000005320014
34áâà3,34ª2,34ª3,34ª4,35,35ª2,35,36
7700000000005320015
36/2,38,39,39ª1,39ª1áâà2,39ª2,39ª3
7700000000005320016
39ª3áâà2,39ª3áâà3,40,41,41ª1,41ª1áâà3
7700000000005320017
41ª2,41ª3,41,42ª1,42ª1áâà2,42ª1áâà3
7700000000005320018
42ª2,44/42
7700000000005320019
2áâà1,3,3áâà1,3áâà3,3áâà6,3ª3,4,5áâà1
7700000000005330001
127055
7707
45286585000
5áâà2,5áâà3,7áâà7,9áâà2,10áâà1,10áâà2
7700000000005330002
10áâà3,10áâà6,11,11áâà1,11_15,12
7700000000005330003
14áâà2,14/19áâà1,14/19áâà8,16,16áâà2
7700000000005330004
17áâà1,17ª1,18,19áâà1,20,20áâà4,20áâà6
7700000000005330005
21,21áâà1,22áâà5,23,24áâà1,24áâà2
7700000000005330006
24áâà3,24áâà4,24áâà5,24áâà6,24áâà7
7700000000005330007
24áâà8,24áâà11,26áâà1,26áâà2,26áâà3,28
7700000000005330008
29áâà1,29áâà2,30áâà2,30áâà3,30áâà4
7700000000005330009
30áâà5,31áâà1,31áâà2,31áâà3,31áâà4
7700000000005330010
32áâà1,32áâà2,32áâà3,33,34/2,35
7700000000005330011
36/1áâà1,36/1áâà3,37áâà14,37áâà15,37ª1
7700000000005330012
37ª2,37ª3,37ª4,37ª4,37ª5,37ª6,37ª7
7700000000005330013
37ª8,37ª9,37ª11,38áâà1,38áâà2,39
7700000000005330014
39áâà3,41,45ª,45ª,45ª,45áâà1,45áâà2
7700000000005330015
45áâà5,45áâà6,45áâà7,45áâà8,45áâà9
7700000000005330016
45áâà10,45áâà11,45áâà12,45áâà13
7700000000005330017
45áâà14,45áâà19,46,47,48,48áâà2,49/2
7700000000005330018
50/1áâà1,50/1áâà1,50/1áâà2,51,52
7700000000005330019
52áâà2,52áâà14,52áâà15,52áâà17,52áâà18
7700000000005330020
52áâà19,54áâà1,54áâà2,54áâà3,54áâà4
7700000000005330021
54áâà5,54áâà6,54áâà39,54/56,55áâà1
7700000000005330022
57áâà1,57/65,58,58ª5,58/12áâà6
7700000000005330023
58/12áâà9,58/12áâà23,60áâà1,60áâà2
7700000000005330024
61áâà1,61áâà2,61áâà3,61áâà4,62,62áâà1
7700000000005330025
62áâà3,62áâà10,62áâà19,62ª1,62ª2
7700000000005330026
62ª11áâà27,62ª12,62ª14,62ª15,62ª16
7700000000005330027
62ª17,62ª18,62ª19,62ª20,62ª21,64
7700000000005330028
64áâà2,65áâà1,65áâà4,67/69,67/69áâà3
7700000000005330029
1,3,3áâà1,3áâà2,3áâà3,3áâà11,4/6
7700000000005340001
5áâà1,5áâà2,5áâà3,7áâà1,7áâà2,10áâà1
7700000000005340002
10áâà2,10áâà13,12,16,18áâà1,18áâà1
7700000000005340003
18áâà4,18áâà5,18áâà7,18áâà8,18áâà9
7700000000005340004
18áâà10,20áâà1,20áâà2,24/35áâà1
7700000000005340005
3áâà3,4,5,7áâà1,7áâà2,8/3áâà1,8/3áâà3
7700000000005350001
125047
7710
10,18áâà1,18áâà2,20áâà1,22áâà3,22áâà4
7700000000005350002
24/13áâà1
7700000000005350003
26áâà1,26ª1,28,30,32,34,48,48áâà2,50
7700000000005350004
52,68,68áâà1,68áâà3,68áâà5,68/70áâà1
7700000000005350005
68/70áâà2,68/70áâà4,68/70áâà5
7700000000005350006
68/70áâà6,68/70áâà7,68/70áâà8
7700000000005350007
2,2áâà1,2áâà2,3,4,5áâà2,7
7700000000005360001
127006
3,3áâà2,7áâà1
7700000000005370001
9áâà1,9áâà2,9áâà3,9áâà4,9ª1,10,11áâà1
7700000000005380001
127473
11áâà2,12áâà1,13,13áâà2,14áâà2,15,15áâà2
7700000000005380002
1,3,5áâà1,8,10,12
7700000000005390001
4,8/10,11áâà1,11,13áâà1,14áâà3,27áâà1
7700000000005400001
7700000000005400002
27áâà7,27áâà8,27áâà9
7700000000005400003
2,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,3áâà12
7700000000005430001
5áâà1,5áâà2,5áâà3,7áâà1,9áâà1,9áâà2
7700000000005430002
9áâà3,9áâà4,11,14/2,16áâà2,16/1,20áâà1
7700000000005430003
20áâà2,20áâà3,20áâà4,20áâà6,20áâà8
7700000000005430004
20/1áâà13,22áâà2,22áâà3,22ª2,25
7700000000005430005
2áâà1,3áâà1,3áâà2,3áâà3,3áâà4,4áâà1
7700000000005440001
107031
4áâà2,4áâà3,5,6,7,7áâà2,9,11
7700000000005440002
1/21áâà1,1/21áâà2,3,3áâà2,19áâà1
7700000000005450001
19áâà2,19/15áâà4,21,23,25áâà1,25áâà3
7700000000005450002
31ª1,31ª1,31ª2,31ª3,31ª4,31ª5,31ª6,31ª7
7700000000005450003
2,2áâà2,4áâà4,4áâà6,4áâà7,4áâà8,4áâà9
7700000000005450004
45280569000
7700000000005450005
4áâà15,4áâà17,4áâà20,4ª1,4ª2,4ª3,4ª4
7700000000005450006
4,4/3áâà2,5,6,7,8,9áâà1,9áâà2,9áâà3
7700000000005500001
127051
9áâà4,10,11áâà1,11áâà2,11áâà3,11áâà4
7700000000005500002
11áâà10,11áâà11,12,14áâà1,14áâà2,16
7700000000005500003
3,4,5,6/9,7,9
7700000000005510001
2,3áâà1,3áâà2,3áâà3,3áâà7,3áâà10
7700000000005520001
3áâà11,3áâà14,3áâà15,3áâà16,3áâà17
7700000000005520002
3áâà21,3áâà22,4áâà1,4áâà2,4áâà3,4áâà4
7700000000005520003
4áâà5,4áâà6,4áâà6,4áâà6,4áâà7,4áâà8
7700000000005520004
4áâà9,4áâà10,5/10áâà2,5/10áâà4
7700000000005520005
5/10áâà17,8
7700000000005520006
1áâà2,1áâà3,4,6áâà1,6áâà3,7/10,8
7700000000005530001
10áâà1,10áâà2,10áâà3,11,11áâà1
7700000000005530002
11/12áâà1,13áâà1,13/14áâà1,13/14áâà2
7700000000005530003
13/14áâà3,14,15/6áâà1,16áâà1,16áâà2
7700000000005530004
17áâà1,18,18áâà2,19áâà1,19áâà2,19áâà3
7700000000005530005
19áâà5,23,25áâà1,25áâà2,27/3áâà1
7700000000005530006
2,6áâà1,8,9/2áâà1,9/2áâà2,9/2áâà3
7700000000005540001
9/2áâà4,9/2áâà5,11,11áâà5,12,14áâà6
7700000000005540002
8áâà1,8áâà2,8áâà4,8áâà10,8áâà19,8áâà21
7700000000005550001
8áâà22,8_16áâà18,16áâà3,16áâà5,16áâà6
7700000000005550002
16áâà7,16áâà8
7700000000005550003
3,3áâà3,4
7700000000005560001
125009
9/10áâà1,9/10áâà7,11áâà1,12/3áâà1
7700000000005570001
7702
45286570000
12/3áâà2,13/9áâà1,14,16/5,17áâà1
7700000000005570002
17áâà2,17áâà3,17áâà5,17áâà6,18/7
7700000000005570003
19áâà1,19áâà2,21/5,22áâà2
7700000000005570004
3áâà1,3áâà2,7,7áâà3
7700000000005570005
2,2áâà2,4/3áâà1,6/3áâà3
7700000000005570006
17áâà2
7700000000005580001
1áâà1,1áâà2,3áâà1,3áâà2,4,4áâà2
7700000000005590001
2/4áâà13,2/4áâà21,4,6áâà1,6áâà2,7
7700000000005600001
8áâà1,8áâà3,10áâà1,14/2
7700000000005600002
9,9áâà2,9áâà3,9áâà4,9áâà5,9ª2,31/1áâà1
7700000000005600003
127030
31/1áâà2,31/1áâà3,31/1áâà5,31,35
7700000000005600004
7700000000005600005
16áâà6,16áâà7,16áâà8,16áâà9,16áâà10
7700000000005600006
16áâà11,16áâà15,30áâà1,32_34ª1,32_34ª2
7700000000005600007
32_34ª3,32_34ª4,36
7700000000005600008
7700000000005610001
124681
8/12
7700000000005610002
7700000000005610003
28áâà6,28áâà7,28áâà8,28áâà12,28áâà17
7700000000005610004
20áâà1,20áâà2,20áâà3,20áâà4,20áâà5
7700000000005610005
20áâà6,20áâà7,20áâà8,20áâà9,22/24áâà12
7700000000005610006
28áâà18,28áâà20,28áâà21,28áâà22
7700000000005610007
28áâà23,28áâà30,28áâà31,28áâà34,28áâà40
7700000000005610008
1/2,3,4áâà1,4áâà2,4áâà4,5,6,6ª1,7
7700000000005610009
8/12áâà2,8,8áâà2,10_16,13_15áâà3,15
7700000000005610010
18,18áâà2
7700000000005610011
30,35/2áâà3,37áâà3,39,41,43,45,45áâà2
7700000000005610012
45áâà2,45áâà3,45áâà10,53áâà1,55áâà1
7700000000005610013
55áâà4,55áâà5,55ª3,55ª5,57áâà1,57áâà2
7700000000005610014
57áâà4,57áâà5,57ª1,59áâà1,59áâà2
7700000000005610015
59áâà3,59áâà4,61áâà1,61áâà2,61áâà4
7700000000005610016
63áâà1,63áâà3,63áâà4,63áâà5,63áâà7
7700000000005610017
11áâà2
7700000000005620001
4/6áâà5,4/6ª1,4/6ª2,8,8áâà2,10
7700000000005620002
11áâà1
7700000000005620003
2/3áâà1,2/3áâà2,3áâà1,3áâà2,4áâà1
7700000000005630001
4áâà2,5,6áâà1,6áâà2,6áâà3,6áâà4,8,10
7700000000005630002
5,7,9áâà1,9áâà2,9áâà3,9áâà4,9áâà5
7700000000005650001
9áâà6,9áâà7,9áâà8,9áâà10,9áâà11,9áâà12
7700000000005650002
9áâà19,9áâà20,9áâà21,9áâà22
7700000000005650003
1áâà1,2,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000005650004
3áâà6,4ª,4ª,4ª,4ª,4ª,4ª
7700000000005650005
7700000000005650006
125267
6áâà7
7700000000005650007
2áâà1,2áâà2,2áâà4,4,4áâà2,18,20áâà1
7700000000005660001
20áâà6,22áâà1,22áâà2,22áâà3,22áâà4
7700000000005660003
22áâà5,22áâà6,22áâà7,22áâà8,22/24áâà1
7700000000005660004
22/24áâà2,22/24áâà13,24/22áâà3,24/22áâà4
7700000000005660005
1/10áâà1,1/10áâà2,1/10áâà3,3_5,7áâà1,9
7700000000005670001
12ª,12ª,12ª,12ª,12ª
7700000000005690001
107016
8/10,10,14áâà1,14áâà1,14áâà3,14áâà4
7700000000005690002
14áâà5,14áâà6,14áâà7,14áâà11,16áâà2
7700000000005690003
16/2áâà2,16/2áâà3,16/2áâà4,16áâà1
7700000000005690004
18áâà1,18áâà2,18/1áâà1,18/1áâà2
7700000000005690006
15áâà1,17áâà1,17áâà2,17áâà3,25,27
7700000000005690007
29áâà1,29áâà2,29áâà3,29áâà4,29áâà5
7700000000005690008
29áâà6
7700000000005690009
7700000000005690005
127381
3/1,3/1áâà2,5,19/22,22ª1,26áâà6
7700000000005700001
3áâà1,3áâà3,4áâà1,6
7700000000005710001
1/49,2,3áâà1,3ª2,3_5áâà1,3_5ª2,5,5áâà2
7700000000005720001
6,6áâà1,6áâà3,7ª2,7/11,8/12,11
7700000000005720002
11áâà3,13,13áâà2,17/21,17,18áâà4,18ª1
7700000000005720003
18ª2,18ª3
7700000000005720004
5,7,7áâà3,11/13
7700000000005730001
7700000000005740001
3áâà7,5áâà1,5áâà2,12,14
7700000000005740002
7,7áâà1,9,11áâà1,13/1,15,15áâà1,15ª1
7700000000005740003
15ª2,18,19,19,19,19áâà1,20,20áâà3
7700000000005740004
21,22áâà1,22áâà2,22áâà3,22áâà4,22áâà5
7700000000005740005
22áâà7,22áâà8,22áâà9,22áâà11,24áâà1
7700000000005740006
24áâà2,24ª1,26,26áâà2,26áâà3,37,37ª4
7700000000005740007
3áâà1,3áâà2,5,13áâà1,13áâà2,13áâà3
7700000000005750001
13áâà6,13áâà8,13áâà11,15áâà1,15áâà8
7700000000005750002
15ª1,15,17,19,21,23,25áâà1,25áâà1
7700000000005750003
25áâà1,25áâà1,25áâà2
7700000000005750004
41,43áâà1
7700000000005750005
2,2áâà2,3áâà1,3áâà3,4áâà2,4áâà5
7700000000005760001
7_9ª1,7_9ª2,7_9ª3,7_9ª4,7_9ª5,7_9ª6
7700000000005760002
8áâà2,9,10,10áâà2,10áâà3,10áâà5,10áâà6
7700000000005760003
10áâà7,10áâà8,10áâà9,10áâà10,10áâà11
7700000000005760004
13ª2,13/1áâà1,13/1áâà2,14/33áâà1
7700000000005760005
4áâà2,4_10,4_8
7700000000005770001
3áâà2,3áâà4,7áâà4
7700000000005770002
5,5áâà2,7,8/11áâà1,10,11,11áâà2,12áâà1
7700000000005780001
12áâà2,14áâà1,14áâà3,14áâà5,15áâà1
7700000000005780002
15áâà2,15áâà3,15/13áâà5,17áâà1,17áâà2
7700000000005780003
17áâà3,17áâà4,17áâà5,17áâà7,17áâà8
7700000000005780004
17áâà9,17áâà11,17áâà13,17áâà19,19áâà1
7700000000005780005
7700000000005780006
19áâà7,19áâà8,21áâà1,21áâà2,21áâà3
7700000000005780007
21áâà5,23/10áâà1,23/10áâà2,23/10áâà4
7700000000005780008
23/10áâà5,23/10áâà6,23/10áâà7
7700000000005780009
23/10áâà12,23/10áâà18,23/10áâà21
7700000000005780010
25áâà1,25áâà2,25áâà7,25áâà1,25áâà2
7700000000005780011
25áâà3,25áâà5,27
7700000000005780012
1áâà1,2áâà1,2áâà2,3áâà1,3áâà2
7700000000005780013
29áâà1,30/7,32áâà2,34áâà1,34áâà2
7700000000005780014
34áâà7,38áâà1,38áâà5,38áâà7,38áâà8
7700000000005780015
38áâà9,38áâà10,38áâà11,38áâà12,38
7700000000005780016
16,20/1,22,24áâà1,24áâà2,24áâà3,24áâà4
7700000000005780017
24áâà5,26áâà2,26áâà3,26áâà4,26áâà5
7700000000005780018
26áâà6,26áâà7,26áâà8,26áâà9,26áâà11
7700000000005780019
26áâà12,26áâà13,28áâà1,28áâà2,28áâà3
7700000000005780020
7700000000005780021
28áâà9,28áâà10,28áâà11,28áâà12,28áâà13
7700000000005780022
28áâà14
7700000000005780023
2,2áâà2
7700000000005790001
1áâà1,3áâà2,3áâà3,4_6áâà1,5áâà1,5áâà2
7700000000005800001
8áâà1,8áâà2,8áâà3,8áâà4,8áâà5,9áâà1
7700000000005800002
9áâà2,11,12áâà1,12áâà2,12áâà3,12áâà4
7700000000005800003
12áâà5,13,15áâà1,15áâà2,17/1,19/2áâà1
7700000000005800004
19/2áâà2,19/2áâà5,21,23,29áâà1
7700000000005800005
5_7áâà1,9áâà1,9áâà2,11áâà1
7700000000005820001
1,5áâà3,8,9,19áâà1,19áâà2,21
7700000000005830001
1áâà1,3,3áâà3,3áâà7
7700000000005840001
1/2áâà1,1/2áâà2
7700000000005850001
3áâà1,3áâà3,3áâà4,3áâà9,3/25áâà2,4áâà1
7700000000005870001
4áâà2
7700000000005870002
2/3,3
7700000000005880001
109012
4_6áâà1,4_6áâà7,4_6áâà9,4_6áâà13,6áâà2
7700000000005890001
7700000000005890002
10/5áâà1,10/5áâà6,10/5áâà8,10/5áâà14,18
7700000000005890003
20áâà1,20áâà2,20áâà3,20áâà4,22áâà1
7700000000005890004
22áâà2,22áâà3,22áâà4,24/7
7700000000005890005
2/12,4,4áâà3,4áâà4,4,6áâà1,6áâà2
7700000000005900001
6áâà3,8,8áâà2,8áâà3,8áâà4,10áâà1,12ª1
7700000000005900002
14áâà1,14áâà2,16áâà1,16áâà2,16áâà3
7700000000005900003
18áâà1,18áâà2,20áâà1,24/27
7700000000005900004
1/15,5,7áâà2,7áâà3,7áâà6,7áâà6
7700000000005920001
7/5áâà6,7/5áâà21,9,9áâà1,9áâà3,9áâà4
7700000000005920002
11,13,13áâà2,17áâà1,17
7700000000005920003
2áâà1,2áâà2,2áâà3,9áâà1,9ª1,12áâà1
7700000000005930001
12áâà2,12áâà3,15áâà1,15áâà2,16
7700000000005930002
16/2áâà9,17áâà1,17áâà2,17áâà3,17áâà4
7700000000005930003
17áâà5,17áâà6,17áâà7,17,18,18/1
7700000000005930004
1,1/23áâà1,2/4,3,4,4áâà2,7
7700000000005940001
2,2áâà2,2áâà3,3áâà1,3ª1,8,9,10,11áâà1
7700000000005950001
11ª2,12,13,14áâà1,14áâà4,16,19,21,23
7700000000005950002
3,9
7700000000005960001
4,9,11áâà1,11áâà2,11áâà3,11áâà3
7700000000005970001
11áâà5,11áâà1,11áâà2,11áâà5,11
7700000000005970002
13áâà1,13áâà2,13áâà3,13áâà1,13áâà2
7700000000005970003
13áâà3,15áâà1,15áâà2,15áâà3,15áâà5
7700000000005970004
15áâà6,15áâà7,15áâà8,15áâà9,15áâà14
7700000000005970005
15áâà15,15áâà1,15áâà2,15áâà3
7700000000005970006
15áâà4,19/2,20,22,24_26áâà2,26,28áâà1
7700000000005970007
28áâà2,28,29áâà1,29áâà2,30áâà4,30áâà5
7700000000005970008
30ª1,30ª2,30ª3,32,32áâà2,34áâà4,34ª1
7700000000005970009
34ª2,34ª3
7700000000005970010
7700000000005980001
7áâà1,7áâà2,7áâà3,7áâà4,7áâà5,9áâà1
7700000000006020001
9áâà3,9áâà4,9áâà5,10áâà1,10áâà3,11,12
7700000000006020002
12áâà2,12áâà3,14,14áâà1
7700000000006020003
2_4áâà3,2_4áâà6,2_4áâà11,2_4áâà12
7700000000006020004
2_4áâà15,6áâà1,6áâà2,6áâà3,6áâà5
7700000000006020005
10áâà1,10ª1,12áâà1,12áâà2,12áâà3
7700000000006030001
12áâà4,12áâà5,12áâà7,12áâà10
7700000000006030002
4áâà1,4áâà2,4áâà3,4áâà4,4áâà5,6áâà1
7700000000006030003
6áâà2,8
7700000000006030004
7áâà1,7áâà2,7áâà3,9,11áâà1,11áâà2,13
7700000000006030005
13,13áâà2,15/29áâà1,15/29áâà3
7700000000006030006
15/29áâà4,15/29áâà8,15/29áâà9
7700000000006030007
15/29áâà45,15/29áâà53,15/29áâà56
7700000000006030008
15/29áâà58,15/29áâà65
7700000000006030009
5,5áâà2
7700000000006030010
3ª1,9,9áâà4,12áâà1,13_15,14,14áâà2
7700000000006040001
14áâà3,16áâà1,16áâà2,16áâà3,16áâà4
7700000000006040002
16áâà5,16áâà6,16áâà7,16áâà8,16áâà9
7700000000006040003
16áâà10,16áâà11,16áâà12,17,19áâà4
7700000000006040004
19áâà5,19áâà7,20,21,21áâà4,21áâà5
7700000000006040005
21áâà8,21áâà10,22,23,25áâà1,25áâà4
7700000000006040006
25áâà4,25áâà5,25áâà6,27áâà1,27áâà2
7700000000006040007
27áâà3,27áâà4,27áâà5,27áâà5,27áâà7
7700000000006040008
27áâà7,27áâà8,27áâà9,27áâà10,27áâà11
7700000000006040009
27áâà12,27áâà13,27áâà14,27áâà16
7700000000006040010
27áâà17,28áâà2,29,29áâà1,31,32,32áâà2
7700000000006040011
5áâà29,5áâà31,9áâà1,9áâà3,9áâà4,9áâà5
7700000000006060001
127018
10áâà1
7700000000006060002
áâà1,áâà2,áâà3,áâà4,áâà13,1,3/5,3/5
7700000000006060003
5áâà1,5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000006060006
5áâà6,5áâà8,5áâà9,5áâà11,5áâà12,5áâà13
7700000000006060007
5áâà14,5áâà15,5áâà17,5áâà18,5áâà19
7700000000006060008
5áâà20,5áâà21,5áâà22,5áâà23,5áâà28
7700000000006060009
9áâà6,9áâà7,9áâà8,9áâà9,9áâà10,9áâà14
7700000000006060010
13áâà1,13/1,14/22ª1,14/22ª2,14/22ª3
7700000000006060011
14/22ª4,14/22ª5,14/22ª7,14,14,14,15
7700000000006060012
7700000000006060013
16áâà21,18,18áâà1,18,19,20,21áâà1
7700000000006060014
21áâà2,21áâà3,21áâà4,21áâà5,22,23,24
7700000000006060015
24áâà2,25,26,31áâà1,31áâà2,33,33áâà1
7700000000006060016
33áâà2,33áâà3,33áâà4,33áâà5,33áâà6
7700000000006060017
7700000000006060018
33áâà12,35,37áâà2,37áâà3,37áâà4,37áâà5
7700000000006060019
41,43,43áâà2,43áâà3,46,46áâà1,46áâà2
7700000000006060020
46áâà4,49áâà1,49áâà2,49áâà3,49áâà4,49
7700000000006060021
7700000000006060022
64áâà2,64áâà3,66,74
7700000000006060023
129272
7700000000006060004
7700000000006060024
53,55
7700000000006060005
127521
56áâà1,56áâà2,56áâà4,60ª1,60ª2,62,64
7700000000006060025
75,75áâà1,75áâà2,75áâà3,75áâà4,75áâà5
7700000000006060027
129594
75áâà6,75áâà7,75áâà8,75áâà9,75áâà11
7700000000006060028
75áâà12,75áâà14,75áâà15,75áâà19
7700000000006060029
75áâà23,75áâà24
7700000000006060030
59,63,65,65ª1,67,67áâà1,69,69áâà1
7700000000006060031
7717
69áâà2,69áâà3,71,73,73ª2,75áâà13
7700000000006060032
75áâà16,75áâà17,75áâà18,75áâà20
7700000000006060033
75áâà21,75áâà22
7700000000006060034
3áâà2,3áâà3,3ª1,7,7áâà4,9,9,13áâà1
7700000000006070001
13áâà5,13áâà12,13áâà15,13áâà16,13áâà17
7700000000006070002
17áâà1,17áâà2,17áâà7,39,39áâà1,39áâà2
7700000000006070003
39áâà17,39áâà25
7700000000006070004
2,4,4áâà2,4áâà3,6áâà1,10,12,16,16áâà2
7700000000006070005
18áâà3,18/5,18/5áâà2,20
7700000000006070006
3,5,5áâà2,6,7áâà1,7áâà2,7áâà3,7áâà1
7700000000006080001
9áâà1,9áâà2,10_12áâà1,10_12áâà6
7700000000006080002
10_12áâà10,10_12áâà11,10_12ª1,10_12ª2
7700000000006080003
10_12ª3,10_12ª4,10_12ª5,10_12ª6
7700000000006080004
10_12ª7,10_12ª9,11,11áâà2,11áâà3,13
7700000000006080005
16áâà1,16áâà1,16_18áâà1,20
7700000000006080006
5_7,9
7700000000006090001
7700000000006100001
3áâà2,3áâà3,3áâà4,5áâà1,5áâà2,5áâà3
7700000000006130001
5áâà4,5áâà5,5áâà6,5áâà7,5áâà8,5áâà9
7700000000006130002
5áâà10,5áâà11,5áâà12
7700000000006130004
2,2áâà1
7700000000006130005
7700000000006130003
1,1áâà2
7700000000006140001
103265
2,2áâà2,2áâà3,4,6,6áâà2,11áâà2,21
7700000000006150001
21áâà1,26,26áâà2,27,27áâà2
7700000000006150002
3áâà1,3áâà2,3áâà3,3áâà4,3,4áâà5
7700000000006160001
4áâà5,4áâà1,4áâà2,4áâà3,5áâà1
7700000000006160002
5áâà2,5áâà3,5áâà4,5áâà5,5áâà14,6áâà2
7700000000006160003
7áâà1,7áâà2,8,10áâà1,10áâà2,10áâà3
7700000000006160004
12áâà1,12áâà2,12áâà3,14áâà2,16áâà1
7700000000006160005
16áâà2
7700000000006160006
2áâà2,4,6áâà1,6áâà2,6áâà3,6áâà4,8,10
7700000000006170001
5,5áâà1,5áâà2,5áâà3,5áâà4,5áâà6,5áâà10
7700000000006170002
5áâà15,5áâà19,5áâà1,7áâà1,7áâà2,7áâà3,9
7700000000006170003
2áâà1,16áâà1,16/1,18,20/1,22áâà1
7700000000006180001
22áâà4,22áâà5,22áâà6,24áâà1,24ª1,24ª2
7700000000006180002
26áâà1,26áâà2,28áâà1,28áâà2,28áâà3
7700000000006180003
28ª1,30áâà1,30áâà2,30áâà3,30áâà4
7700000000006180004
30áâà5,30áâà6,30ª2,32áâà1,32áâà1
7700000000006180005
32áâà2,32áâà3,32áâà4,32áâà7,34áâà1
7700000000006180006
5,7áâà1,7áâà3,7áâà11,9,11áâà1,11áâà2
7700000000006180007
11áâà3,11áâà6,13,13áâà3,15áâà1,15ª2
7700000000006180008
34áâà2
7700000000006180009
17,19áâà3,19áâà4,19áâà5,21áâà1,21áâà2
7700000000006180010
7700000000006180011
21áâà13,23áâà1,23áâà2,23áâà3,23áâà4
7700000000006180012
7700000000006180013
25áâà6,25áâà7,25áâà8,25áâà9,25áâà11
7700000000006180014
1,2,2áâà2,3,4áâà1,4áâà2,4áâà1,5,5áâà1
7700000000006190001
6áâà1,6áâà2,6áâà3,8áâà1,8áâà2,11áâà1
7700000000006190002
11áâà2,11áâà3,11áâà1,11áâà2,15
7700000000006190003
4áâà2,4áâà3,15,16áâà1,16áâà2,16áâà5
7700000000006210001
16áâà10,16áâà12,16áâà14,17áâà1,18,19áâà1
7700000000006210002
4áâà1,4áâà5,4,5áâà1,5áâà2,5/4áâà33
7700000000006220001
5áâà1,6,8_10ª,8_10ª,14/28,16áâà2
7700000000006220003
7700000000006220002
129090
1/15,5,5áâà,5áâà2,5áâà3,5/9,17/27áâà1
7700000000006230001
17/27áâà2,24áâà4
7700000000006230002
8,10/36áâà1,10/36áâà2
7700000000006230003
7708
45286565000
2,6,9
7700000000006240001
107045
4/2áâà1,4/2áâà2,4/2áâà3,5áâà3,5áâà4
7700000000006250001
5áâà5,5áâà6,5áâà7,5áâà9,5áâà12
7700000000006250002
5,13ª2,13ª3,13/47ª4,13/47ª5,20áâà1
7700000000006260001
22áâà1
7700000000006260002
24/1áâà1,24/1áâà3,25/2,25/2áâà2
7700000000006270001
105066
26áâà10,26áâà12,26áâà13,26áâà16,26ª1
7700000000006270002
26ª2,26ª3,26ª4,26ª5,26ª6,26ª7,27áâà1
7700000000006270003
27áâà2,27áâà5,28áâà1,28áâà2,28áâà3
7700000000006270004
28ª3,29,29áâà2,29áâà3,29áâà5,29áâà6
7700000000006270005
29áâà7,30,31áâà1,31áâà2,31áâà3,32
7700000000006270006
33áâà1,33áâà2,33áâà2,33áâà3,35áâà1
7700000000006270007
37áâà1,37áâà2,37,37áâà2
7700000000006270008
4áâà1,4_6áâà2,4_6áâà3,4_6áâà4,4_6áâà10
7700000000006270009
107078
4_6áâà11,4_6áâà14,4_6áâà16,4_6áâà18,8
7700000000006270010
10áâà1,10áâà2,12áâà2,12áâà2,12áâà3
7700000000006270011
12áâà4,14áâà1,14áâà2,14áâà3,14áâà4
7700000000006270012
14áâà7,16áâà1,16áâà2,16áâà3,16áâà4
7700000000006270013
16áâà7,16áâà8,16áâà10,18áâà1,18áâà2
7700000000006270014
18áâà3,18áâà4,18áâà5,20,20áâà1,20áâà2
7700000000006270015
20áâà3,20áâà4,20áâà5,20áâà8,20áâà9
7700000000006270016
20áâà10,20áâà11,20áâà12,20áâà16
7700000000006270017
22/2áâà1,22/2áâà2,22/2áâà3,22/2áâà4
7700000000006270018
22/2áâà5,22/2áâà6,22/2áâà7
7700000000006270019
5áâà1,5áâà2,5áâà3,5áâà6,5áâà7,7,9
7700000000006270020
9áâà1,9áâà3,9áâà4,9áâà6,9áâà8,11áâà2
7700000000006270021
11áâà3,13áâà7,13/2áâà1,13/2áâà2
7700000000006270022
13/2áâà3,13/2áâà4,13/2áâà5,15áâà1,17
7700000000006270023
17áâà2,19áâà1,19áâà2,19áâà5,19áâà6
7700000000006270024
19áâà7,21áâà1,23áâà1,23áâà1,23áâà1
7700000000006270025
23áâà2,23áâà3,23áâà4,23áâà7,23áâà8
7700000000006270026
23áâà10,23áâà1,23áâà2,23áâà3
7700000000006270027
23áâà4,23áâà5,23áâà6,23áâà7
7700000000006270028
23áâà10,23áâà2,23áâà20
7700000000006270029
2áâà1,2/1áâà1,2/1áâà2
7700000000006270030
107174
1,3/4áâà9,4,6áâà1,6áâà2,6áâà3,7,7áâà3
7700000000006280001
7700000000006280002
8áâà7,8áâà8,9
7700000000006280003
2,4,6,6áâà4,8,8áâà2,10,12
7700000000006290001
3áâà1,3áâà3,3áâà4,3áâà5,3áâà6,5/20áâà1
7700000000006290002
5/20áâà2,5/20áâà3,5/20áâà5,5/20áâà7
7700000000006290003
4áâà1,4áâà2,4áâà3,4áâà4,6áâà1,6áâà2
7700000000006300001
101000
6áâà3,6áâà4,8áâà1,8áâà10
7700000000006300002
2/38,3/1,3/1áâà2,4áâà1,7_9áâà1,11áâà1
7700000000006310001
107140
11áâà2,11áâà3,11áâà4,11áâà6
7700000000006310002
3áâà1,3áâà2,3áâà3,5,6,8,10áâà1,12,14
7700000000006320001
2,3áâà1,3áâà2,4,5,6,8,12/16,13,14
7700000000006330001
16áâà9,19,19áâà1,19áâà2,20,22,25áâà2
7700000000006330002
25_29áâà1,29áâà2,29áâà3,31áâà1
7700000000006330003
31áâà2,33,33/17áâà1
7700000000006330004
2,2áâà2,3áâà1,4,4ª1,5áâà2,5áâà3,6áâà2
7700000000006340001
7áâà1,7áâà2,8,9áâà1,10,11,11áâà2,12,13
7700000000006340002
7700000000006340003
2/4áâà1,2/4áâà2,8áâà1,8áâà3
7700000000006350001
2/1áâà1,2/1áâà2,4áâà7,4/2áâà1,4/2áâà2
7700000000006360001
4/2áâà3,6áâà3,6/2áâà1,6/2áâà2,10áâà3
7700000000006360003
11áâà1,11áâà2,11áâà3,11áâà4,13,15,15
7700000000006360005
17áâà1,21/40,27,29,29áâà2,31áâà1
7700000000006360006
31áâà3,31áâà4,31áâà6,31áâà7,31áâà12
7700000000006360007
31áâà13,31áâà14,31áâà15
7700000000006360008
26áâà4,28,30,32,32áâà1,33,35,43,43áâà2
7700000000006360002
12áâà3,12/12áâà4,12/12áâà5,12/12áâà6
7700000000006360009
12/12áâà7,12áâà1,14áâà1,14áâà1
7700000000006360010
16áâà1,16áâà2,16áâà3,16áâà5,16áâà6
7700000000006360011
16áâà7,16áâà12,20áâà1,20áâà3,20áâà5
7700000000006360012
20áâà7,22,24,26áâà1,26áâà2,26áâà3
7700000000006360013
45,45áâà4,45áâà5,47,47áâà1,49
7700000000006360014
32/19áâà3,32/58áâà1,32/61áâà1
7700000000006360004
129110
3_5áâà1,3_5áâà2,3_5áâà3,3_5áâà4
7700000000006370001
3_5áâà5,3_5áâà6,3_5áâà7,3_5áâà8
7700000000006370002
3_5áâà9,4áâà1,4áâà4,9áâà2
7700000000006370003
1áâà1,1áâà2,1áâà3,1áâà4,1áâà1,1áâà2
7700000000006400001
1áâà3,1áâà4,1áâà5,1áâà6,1áâà7
7700000000006400003
1áâà8,1áâà9,1áâà10,1áâà12,1áâà13
7700000000006400004
1áâà14,1áâà15,1áâà16,1áâà18
7700000000006400005
1áâà19,1áâà32,2,2áâà1,2áâà2,2
7700000000006400006
2áâà2,2,3,3áâà1,3áâà2,3áâà3,3áâà4
7700000000006400007
3áâà6,3áâà7,3áâà8,3áâà9,3áâà10,3áâà11
7700000000006400008
3áâà12,3áâà13,3áâà14,3áâà15,3/10áâà1
7700000000006400009
3/30,3/30áâà1,3/30áâà3,3/30áâà4
7700000000006400010
3/30áâà5,3/32áâà1,3/32áâà2,3/32áâà3
7700000000006400011
3/32áâà4,3/32áâà5,3/32áâà6,3/32áâà7
7700000000006400012
3/32áâà8,3/32áâà9,3/32áâà10,3/32áâà12
7700000000006400013
3/32áâà13,3/35,3/36,3/36áâà1,3/36áâà2
7700000000006400014
3/36áâà3,3/36áâà4,3/36áâà5,3/36áâà6
7700000000006400015
3/36áâà7,3/36áâà8,3/36áâà9,3/36áâà10
7700000000006400016
3/36áâà11,3/42,3/45áâà1,3/45áâà2,3/46
7700000000006400017
3/49,3/59,3/75,3/75,3/9,3/9áâà1,3
7700000000006400018
3áâà1,3áâà2,3áâà3,3áâà6,3áâà7
7700000000006400019
3áâà8,3áâà16,3áâà17,3áâà18,3áâà19
7700000000006400020
3áâà20,3,4áâà1,4áâà4,4áâà1,4áâà2,5
7700000000006400021
5áâà2,5áâà3,5áâà6,5áâà7,5áâà8,5áâà9
7700000000006400022
5/42áâà1,5áâà1,5áâà2,6,6áâà1
7700000000006400023
32/40áâà1,32/40áâà2,32/40áâà3
7700000000006400024
32/40áâà4,32/40áâà5,32/40áâà6
7700000000006400025
32/40áâà7,32/40áâà8,32/40áâà9
7700000000006400026
1áâà20
7700000000006400002
45286590000
3áâà1,7áâà1,9áâà1,9áâà2,9áâà3,9áâà4
7700000000006410001
9áâà10,9ª4
7700000000006410002
2/7áâà1,2/7áâà2,2/7áâà4,4áâà1,6áâà1
7700000000006410003
6_8áâà2,10áâà1,14,14áâà1,16,16áâà4
7700000000006410004
18áâà1,18áâà2,20,22áâà3,24áâà1,24áâà3
7700000000006410005
26áâà1
7700000000006410006
6áâà1,9/10,9/10áâà2,10áâà4,10áâà5,10ª1
7700000000006420001
10ª2,10,11áâà1,12,13,14,15/9áâà1
7700000000006420002
2áâà1,3,3áâà1,3áâà4,3áâà2,3áâà3
7700000000006430001
1,1áâà2,1áâà3,1áâà9,3áâà1,3/5áâà1
7700000000006440001
3/5áâà2,3/5áâà3,3/5áâà4,3/5áâà5
7700000000006440002
3/5áâà6,3/5áâà9,3_5áâà1,3_5áâà2
7700000000006440003
3_5áâà4,3_5áâà5,3,5,5áâà2,7/9,7_9
7700000000006440004
7_9áâà2,9,9áâà1,9áâà2,9áâà3,9áâà4
7700000000006440005
9áâà5,9áâà6,9áâà10,9áâà11,9áâà12
7700000000006440006
9áâà13,9áâà19,9áâà20,9áâà25
7700000000006440007
9áâà26,9áâà27,9áâà28,9áâà29
7700000000006440008
9áâà30,9áâà31,9áâà32,9áâà33
7700000000006440009
9áâà34,9áâà35,9áâà37,9áâà38
7700000000006440010
9áâà39,9áâà40,9áâà42,9áâà43
7700000000006440011
9áâà44,9áâà45,11,11áâà2,12áâà1
7700000000006440012
12áâà10,12/1áâà1,13,13,13áâà1
7700000000006440013
13áâà5,14áâà1,14áâà3,16áâà1,18áâà1
7700000000006440014
20,22_24,22_24áâà1,22_24áâà2,22_24áâà3
7700000000006440015
22,22áâà2,24áâà1,24,26,28,28áâà3
7700000000006440016
30_34áâà1,30_34áâà3,30_34áâà4,36áâà1
7700000000006440017
36áâà2,36áâà3,38áâà1
7700000000006440018
7áâà1,7áâà2,7áâà2,7áâà3,7áâà4,7áâà5
7700000000006450001
7700000000006450002
7700000000006450003
7áâà17
7700000000006450004
6/21,8/12
7700000000006460001
1áâà1,1áâà3,1áâà4,2
7700000000006470001
1,2/1áâà1,2/1áâà2,2/1áâà3,2/1áâà4
7700000000006480001
2/1áâà10,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000006480002
3áâà6,3áâà8,3áâà9,3áâà13,3,3,3
7700000000006480003
3áâà1,7áâà1,7áâà2,7áâà3,7áâà1
7700000000006480004
7áâà5,8áâà3,8áâà4,8ª2,8ª3,9,9,10
7700000000006480005
10áâà1,10áâà3,10ª2,10ª7,10áâà1
7700000000006480006
10áâà2,10áâà3,11áâà1,11áâà2
7700000000006480007
11áâà3,11áâà4,11áâà5,11áâà6
7700000000006480008
11áâà12,13áâà1,14áâà1,14áâà3,14áâà4
7700000000006480009
14áâà1,14,14,15áâà1,15áâà2,15áâà2
7700000000006480010
15áâà4,15áâà1,15áâà2,16áâà1,16áâà2
7700000000006480011
16áâà3,16áâà4,16áâà5,16áâà2,16,17
7700000000006480012
17áâà,17áâà6,17áâà1,19,19,20áâà1
7700000000006480013
20,20áâà2,21áâà1,21áâà2,21áâà3
7700000000006480014
21áâà5,22,23áâà1,24,30,32áâà1,32áâà3
7700000000006480015
32áâà6,32áâà9,34,38/19áâà1,38/19áâà2
7700000000006480016
2/8ª1
7700000000006490001
1áâà4,2/8áâà1,2/8áâà8,2/8áâà9,2/8áâà22
7700000000006490002
2/8ª2,2/8ª3,2/8ª4,2/8ª4,2/8ª5,2/8ª6
7700000000006490003
2/8ª7,7áâà2,7áâà2,7áâà3,7áâà4,7áâà5
7700000000006490004
7áâà6,7áâà7,7áâà8,7áâà10,7áâà12,7áâà14
7700000000006490005
7áâà24,7áâà25,7áâà27,7áâà31,7áâà32
7700000000006490006
7áâà53,7áâà56,7áâà57,10/3,12,12áâà2,14
7700000000006490007
34/16,35áâà,35áâà1,35áâà1,35áâà2
7700000000006500001
35áâà3,35áâà4,35áâà5,35áâà6,35áâà7
7700000000006500002
35áâà9,35áâà23,35áâà25,35áâà34,35áâà38
7700000000006500003
35áâà48,35áâà49,35áâà50,35áâà52
7700000000006500004
35áâà58,35áâà59,35áâà60,35áâà64,39áâà1
7700000000006500005
39áâà2,39áâà3,39áâà4,40áâà30,40áâà31
7700000000006500006
40áâà32,40/12ª1,40/12ª2,40/12ª3
7700000000006500007
40/12ª4,40/12ª5,40/12ª6,40/12ª7
7700000000006500008
40/12ª8,40/12ª9,40/12ª10,40/12ª11
7700000000006500009
40/12ª12,40/12ª16,40/12ª17,40/12ª19
7700000000006500010
40/12ª20,40/12ª21,40/12ª24,40/12ª29
7700000000006500011
41,42,42áâà3,43,43áâà3,44,44áâà2,45/17
7700000000006500012
7700000000006500013
12áâà6,12áâà7,12áâà12,13áâà1,14áâà1
7700000000006500014
14,14,15áâà1,15_17áâà2,20,21,21áâà1
7700000000006500015
22,23,24,25áâà2,28,28áâà2,28áâà3,28
7700000000006500016
30,32áâà3,32/29áâà2,32/29áâà3
7700000000006500017
3,4,5áâà1,5áâà4,5áâà5,5áâà6,5áâà7
7700000000006500018
5áâà8,5áâà10,5áâà11,5áâà12,6áâà1,6áâà2
7700000000006500019
3,5,5áâà2,7_9áâà2,9,9áâà2,11,13
7700000000006510001
2,2áâà2,3áâà1,5áâà1,5áâà2,7áâà1,7áâà5
7700000000006520001
7áâà7,7áâà8,7áâà9,8áâà2,16áâà1,18
7700000000006520002
5,6,7,8,9,19áâà1,19áâà2,19áâà3,19áâà4
7700000000006530001
19áâà5,19áâà7,19áâà11,19áâà12,21áâà1
7700000000006530002
21áâà2
7700000000006530003
5,5áâà1,5áâà3,14/13áâà1
7700000000006540001
2,5,13/14áâà2,17áâà1,17áâà2
7700000000006550001
107113
7700000000006560001
4áâà4,4áâà4,4áâà4,4áâà9,5,10áâà2
7700000000006570001
10áâà7
7700000000006570002
1/12áâà1,1/12áâà3,7,8áâà1,8áâà2,8áâà6
7700000000006580001
9,10áâà1,11,13,14/16
7700000000006580002
4,10_12áâà1,12,13/17áâà1,15áâà1
7700000000006590001
2,10áâà2,10áâà3,10áâà4,10áâà5,18áâà1
7700000000006600001
18áâà2,18áâà3,18áâà4,18áâà5,18áâà6
7700000000006600002
18áâà6,18áâà7,18áâà8,18áâà9,18áâà10
7700000000006600003
18áâà11,18áâà12,18áâà13,18áâà14
7700000000006600004
18áâà15,18áâà16,18áâà17,18áâà19
7700000000006600005
18áâà20,18áâà21
7700000000006600006
7ª,7ª,7ª,7ª,7ª
7700000000006610001
9áâà1,10áâà1,10áâà3,10áâà4,10áâà5
7700000000006610002
11áâà1,12áâà1,12áâà2,12áâà4,12/7áâà8
7700000000006610003
14áâà1,16
7700000000006610004
2áâà1,4,4áâà1,7,8,9,9áâà1,10
7700000000006620001
22/14,25áâà1,25áâà2,26áâà1,26áâà5
7700000000006650001
26áâà10,27áâà1,27áâà2,27áâà3,27áâà8
7700000000006650002
27áâà9,27áâà10,27áâà11,27áâà12,27áâà13
7700000000006650003
27áâà15,27áâà17,27áâà18,28áâà1,28áâà2
7700000000006650004
7700000000006650005
29áâà6,30,30,30áâà1,30áâà8,31/7áâà5
7700000000006650006
31/7áâà6,31/7áâà21,31/7áâà25,31/7ª1
7700000000006650008
31/7ª2,31/7ª4,31/7ª5,31/7ª9,31/7ª12
7700000000006650009
31/7ª13,31/7ª14,31/7ª20,31/7ª22
7700000000006650011
31/7ª23,31/7ª24,32,36,38,38áâà2,38áâà3
7700000000006650012
38áâà1
7700000000006650013
23áâà1,23áâà2,23áâà3,23áâà5,23áâà6
7700000000006650014
23áâà8,23áâà10
7700000000006650015
17,17áâà1,21áâà1,21áâà2
7700000000006650016
18áâà1,18áâà2,18áâà3,18áâà6,18áâà11
7700000000006650017
18áâà13,18áâà25,18áâà27
7700000000006650018
2/7,4,4áâà2,8,8áâà1,8áâà2,8áâà3
7700000000006650019
8áâà4,8áâà6,10,14áâà1,16/11áâà1
7700000000006650020
18áâà1,18áâà5,18áâà7,18áâà10,18áâà14
7700000000006650021
18áâà17,18áâà21,18áâà22
7700000000006650022
7700000000006650007
107228
2,7,9,18/20
7700000000006660001
3_5,4,4áâà2,5
7700000000006670001
5áâà1,5áâà2,5,5áâà1,5áâà2
7700000000006680001
2,4áâà9,4áâà10,4áâà11,4áâà12,4ª1,4ª2
7700000000006690001
4ª3,4ª5,4ª6,4ª7,4ª8,6,6áâà7,6áâà8
7700000000006690002
6áâà9,14áâà1,14áâà2,14áâà3,14áâà4
7700000000006690003
14áâà5,14áâà7,14áâà8,14áâà9,16,16áâà1
7700000000006690004
16áâà2,16áâà5,16áâà6,16áâà7,16áâà8
7700000000006690005
16áâà9,16ª6,28áâà1,28áâà2,28áâà3,28áâà4
7700000000006690006
9áâà1,9áâà2,9áâà3,9áâà4,11áâà1,11áâà1
7700000000006690007
11áâà2,11áâà3,15,17,17áâà2,17áâà3,19
7700000000006690008
19áâà2,21,21áâà1,21/25,23,25,25áâà2
7700000000006690009
25áâà3,25áâà4,25áâà5,25áâà6,25áâà8,27
7700000000006690010
27áâà1,27áâà3,27áâà4,27áâà5,27áâà6
7700000000006690011
27áâà16,29/32áâà1,31ª2,33,35áâà1
7700000000006690012
35áâà3,43,45ª,45ª,45áâà1,45áâà2
7700000000006690013
45áâà3,45áâà5,47áâà1,47áâà2,47áâà3
7700000000006690014
47áâà4,47áâà5,47áâà6,51áâà5
7700000000006690015
8áâà14
7700000000006700001
6,205áâà1,205áâà3,205áâà6,205áâà7
7700000000006710001
205áâà8,205áâà9,205áâà10,205áâà11
7700000000006710002
205áâà12,205áâà13,205áâà14,205áâà15
7700000000006710003
2,3ª,3áâà1,3áâà2,3áâà6,3,4,5áâà1
7700000000006720001
5áâà1,5áâà2,5áâà3,6,8,10áâà1,10áâà2
7700000000006720002
2,12/12
7700000000006730001
7700000000006740001
2,6,6áâà2,6áâà3,10,14áâà1,20áâà1
7700000000006740002
20áâà2,20áâà8,22,24,30,30áâà3,30áâà4
7700000000006740003
30áâà5,30áâà6,30áâà7,30áâà9,30áâà11
7700000000006740004
30áâà1,30áâà2
7700000000006740005
7áâà,7áâà,7áâà,7áâà,7áâà,7áâà1
7700000000006760001
7áâà2,7áâà4,7áâà9,11áâà,11áâà3,34áâà1
7700000000006760002
36,38,38
7700000000006760003
4,5,6,7,8,9,11,13,15
7700000000006770001
18/20,18/20áâà6,22,22áâà1,22áâà3
7700000000006780001
107014
7718
45263591000
22áâà4,24,26,26ª1,26áâà1,26áâà1,28
7700000000006780002
28áâà1,28áâà1,28áâà2,28áâà3
7700000000006780003
7700000000006780004
19áâà7,19áâà9,19áâà10,19áâà12,19áâà13
7700000000006780005
19áâà15,19áâà16,19áâà17,19_21áâà7
7700000000006780006
19_21áâà16,23,23,23áâà1,25,25áâà1,27
7700000000006780007
27áâà2,29,29áâà2,29áâà3,31
7700000000006780008
1,2/1áâà1,2/1áâà2,3áâà1,3áâà2,4áâà1
7700000000006780009
4áâà4,4áâà5,5,6,7áâà1,7áâà2,7áâà3
7700000000006780010
7áâà3,8,9,9áâà2,9áâà3,10áâà1,10áâà3
7700000000006780011
10áâà4,10áâà6,11,11áâà2,12áâà4,12ª1
7700000000006780012
12ª2,12ª3,13,13áâà1,13áâà2,13áâà3
7700000000006780013
13áâà4,13áâà5,13áâà6,13áâà2,14/16áâà1
7700000000006780014
2,4,5,8,9,9áâà2,13/3
7700000000006790001
6,6áâà3,13áâà1,13áâà6,13áâà11,13áâà11
7700000000006800001
2áâà1,2áâà2,2áâà3,4áâà1,4áâà2,4áâà3
7700000000006810001
4áâà4,4áâà6,4áâà8,6áâà1,6áâà2,8áâà1
7700000000006810002
12/23áâà1,12/23áâà2,12/23áâà3
7700000000006810003
1áâà3,1/2ª,1/2áâà1,1/2áâà3,1/2áâà4
7700000000006810004
1/2áâà5,1/2áâà23,1/2ª2,1/2ª3,1/2ª4
7700000000006810005
1/2ª5,1/2ª6,1/2ª7,1áâà1,3áâà3,3áâà4
7700000000006810006
3ª1,3ª2,13áâà2,17/2,18áâà1,19ª1,19ª2
7700000000006810007
19ª3,20áâà1,20áâà2,22/49áâà3,24,26,28
7700000000006810008
11/1
7700000000006810009
107139
21/1
7700000000006810010
107217
1,3,4áâà1,4áâà2,6,6áâà1,8áâà1,10áâà1
7700000000006820001
10áâà2,10áâà4
7700000000006820002
1,3áâà1,3áâà2,3áâà4,4,5ª1,5ª2,6áâà1
7700000000006830001
7ª1,7ª2
7700000000006830002
7700000000006840001
6/1,6/1áâà1,7ª1,8,8áâà1,9áâà1,9áâà2
7700000000006840002
9áâà3,9áâà4,10áâà3,10ª1,11áâà1,11áâà2
7700000000006840003
12,12áâà2,13áâà1,15áâà1,15áâà2,15áâà4
7700000000006840004
15áâà5,15áâà6,15áâà7,17,19áâà1,20áâà3
7700000000006840005
21,21áâà2,21áâà3,23,25áâà1,25áâà2
7700000000006840006
25áâà3,27,27áâà2,29,31,31ª2,33,35,37
7700000000006840007
2áâà1,6/1áâà1,6/1áâà2,11,11ª,11ª
7700000000006850001
3,5,7,9/2áâà1,9/2áâà2
7700000000006850002
1,1áâà1,3áâà3,3áâà4,3áâà5,5áâà1,7,9,11
7700000000006870001
11áâà3,13áâà1,15,17áâà1,19,27áâà1
7700000000006870002
27áâà3,27áâà5,27áâà7,27áâà8,29
7700000000006870003
4,6,6/2áâà2,8,10,10/3áâà1,12,12/2,14
7700000000006870004
16/2,20,22/1áâà1,24/2áâà1,24/2áâà3
7700000000006870005
24/2áâà9,26/1,28,30,32,34/1áâà1
7700000000006870006
21/28áâà1
7700000000006870007
2,3áâà1,4,5
7700000000006880001
2,2/4,3áâà1
7700000000006890001
4áâà1,5áâà1,5áâà2,5áâà3,8,8áâà1,11áâà1
7700000000006900001
11áâà2,11áâà3,11áâà4,11áâà5,11,13áâà1
7700000000006900002
13áâà2,13áâà4,14ª,14ª,16áâà1,16áâà3
7700000000006900003
16ª1,22áâà1,22áâà2
7700000000006900004
19,21áâà1,21áâà2,24áâà1,26
7700000000006900005
3áâà1,3áâà2,5áâà1,6áâà1,6áâà3,8áâà2
7700000000006920001
8/3áâà1,10áâà2,10/5,13áâà1,13áâà2
7700000000006920002
27,28,29ª1,30áâà2,30áâà3,30ª1,30ª2
7700000000006920003
31áâà1,31áâà2,31áâà3,31áâà4,31áâà7
7700000000006920004
32áâà2,39áâà5
7700000000006920005
25/28áâà1
7700000000006970001
2ª1,2ª2,2ª4,2ª5,2ª6,2/1áâà3,2áâà1
7700000000006970002
2áâà2,2áâà4,2áâà5,2,3áâà1,3áâà2
7700000000006970003
3áâà3,3áâà5,4áâà1,5áâà1,5áâà2,5ª1
7700000000006970004
5/9ª2,6,6áâà2,8,8áâà1,9áâà1,9áâà2
7700000000006970005
9áâà3,9áâà4,9áâà6,10/2,10/2áâà1,11
7700000000006970006
19áâà2,19áâà3,19áâà3,19áâà4,19áâà10
7700000000006970007
11áâà1,12,13,15,16,16áâà1,16ª2,18
7700000000006970008
3áâà1,3áâà7,5áâà1,5áâà2,5áâà6
7700000000006980001
6áâà1,9,10,12,12áâà1
7700000000007000001
1,2,2ª2,3,4/45ª2,4,6áâà2,6áâà3,6ª2
7700000000007010001
121170
7730
45268554000
6áâà1,6ª1,7,8ª1,8ª2,9,9áâà2,10ª1
7700000000007010002
10ª1áâà3,10ª2,12,14,14áâà1,14áâà2
7700000000007010003
14áâà3,14áâà4,15,15áâà1,15áâà2,15áâà3
7700000000007010004
15áâà4,15áâà5,15áâà6,15áâà7,15áâà8
7700000000007010005
15áâà9,16,18
7700000000007010006
2áâà1,4,4áâà2,5,6áâà1,8,8,9áâà1,9áâà2
7700000000007020001
123022
7703
45286575000
10áâà1,10áâà2,10áâà3,10áâà1,11áâà1
7700000000007020002
14áâà1,14_16áâà1,15,16,17,19,21,23,25
7700000000007020003
27áâà1,27áâà5,27áâà6,27áâà7
7700000000007020004
1,3,5áâà2,7áâà1,7áâà3,7áâà4
7700000000007020005
123100
24,24áâà1,26ª1,26ª1áâà1,26ª2,26ª2áâà2
7700000000007040001
127237
28ª1,28ª2,28ª3,30,32,32áâà2
7700000000007040002
4ª1,4ª1áâà1,4ª1áâà2,4ª2,6,6áâà2,6áâà3
7700000000007040003
8,8áâà1,10,10áâà2,12,12áâà2,16ª1,16ª2,22
7700000000007040004
14,14áâà2,16,16áâà9,18,18áâà1,20
7700000000007040005
20áâà8,22ª1,22ª2,22ª2áâà3,22ª3
7700000000007040006
2ª1,2ª1áâà1,2ª1áâà2,2ª2
7700000000007040007
1ª1,1ª4,1,3ª1,3ª2,3ª2áâà1,3ª2áâà2,3
7700000000007040008
5ª1,5ª3,5ª3áâà2,5,7ª1,7ª1áâà1,7,7,9
7700000000007040009
9áâà2,11,11ª1,11ª2,11ª3,11ª3áâà2,11ª4
7700000000007040010
11ª4áâà1,11ª5,11ª5áâà2,11ª6,11ª7
7700000000007040011
11ª7áâà1,11ª7áâà2,11ª7áâà4,11ª8
7700000000007040012
11ª8áâà1,11ª10
7700000000007040013
2,3,4,4áâà1,5,5áâà1,6,7,8,9,10ª1
7700000000007050001
129347
7716
45280597000
10ª1áâà1,10ª2,10ª3,10,10áâà1,10áâà2
7700000000007050002
10áâà3,10áâà4,10áâà5,11,12,12áâà1,15
7700000000007050003
2,2,3,4áâà1,4áâà2,4áâà4,4áâà5,4áâà6
7700000000007070001
4áâà7,4áâà8,4áâà12,4,5,6,6áâà3,7
7700000000007070002
9áâà1,9áâà9,9áâà10,10/21áâà8,11,17
7700000000007070003
17áâà2,21áâà1
7700000000007070004
7,7áâà1,7,9áâà2,9ª1,9ª1áâà1,9ª1áâà3
7700000000007080001
127572
9ª2,9ª2áâà1,9ª3,11áâà1,11áâà2,11ª1
7700000000007080002
11ª1áâà3,11ª2,11ª3,14,14áâà1,14ª1,14ª2
7700000000007080003
14,15áâà5,15áâà7,15áâà8,15áâà9
7700000000007080004
15áâà10,15áâà11,15ª1,15ª2,15ª3,15ª4
7700000000007080005
16áâà1,16áâà2,16áâà3,16,16áâà2,18
7700000000007080006
18áâà2,20,22,24,24ª1,24ª1áâà2,24ª2,24
7700000000007080007
28,28áâà1,30,30áâà1,30áâà2,30áâà3
7700000000007080008
1,1áâà1,1áâà2,2,2áâà1,2áâà2,2ª2,3,3
7700000000007080009
127576
3,3áâà1,3áâà2,4,4ª1,4ª1áâà1,4ª1áâà2
7700000000007080010
4ª2,5,5áâà2,6,6,8,8,10,10áâà1,12
7700000000007080011
12áâà1,12áâà2
7700000000007080012
1áâà1,1áâà2,2,2ª1,2ª2
7700000000007090001
119435
7704
3,4,4,5áâà4,5ª1,5ª2,6áâà4,6ª1,6ª2,6ª3
7700000000007100001
7,7/10,7áâà3,8ª1,8ª2,8ª3,9ª1,9ª2
7700000000007100002
9ª2áâà1,9ª2áâà3,10,11,11áâà2,11,12
7700000000007100003
12áâà1,13,14,14,14áâà2,14,15,15áâà2
7700000000007100004
16,16áâà1,17,18,19/30,20,22/32ª1
7700000000007100005
22/32ª2
7700000000007100006
2,2áâà1,2,4,4áâà1,5áâà1,5áâà2,5áâà3
7700000000007110001
119619
7729
45268588000
5áâà4,5áâà5,5áâà6,5áâà9,5áâà10,5áâà11
7700000000007110002
5áâà12,6,6áâà1,6ª1,6ª2,7,7áâà1,7áâà2
7700000000007110003
7ª1,7,7áâà1,7áâà2,7áâà3,7,7áâà1
7700000000007110004
7áâà2,7áâà3,7áâà4,7áâà5,8,8ª1
7700000000007110005
8ª1áâà1,8ª1,8ª2,9,9áâà1,9ª1,9ª1áâà1
7700000000007110006
9ª2,9ª2,9,10,10ª1,10ª2,11,11áâà1
7700000000007110007
11áâà2,11ª1,13,13áâà1,13áâà2,13áâà4
7700000000007110008
13áâà5,13áâà6,13áâà7,13áâà8,13áâà10
7700000000007110009
13áâà11,13áâà14,13áâà15,13áâà16
7700000000007110010
12,12áâà1,12áâà2,14,16,16áâà1,16ª1,18
7700000000007110011
119620
18ª1,18ª2,18,20,20áâà1,20áâà2,22
7700000000007110012
22áâà1,26áâà1,26áâà2,28,30,30áâà1
7700000000007110013
30áâà2,36,38,38áâà1
7700000000007110014
7700000000007120001
123182
7733
45283587000
13,17,17áâà2,17áâà3,17áâà4,19,22áâà1
7700000000007120002
7734
22áâà2,22áâà3,23,24,24áâà1,24áâà2,24
7700000000007120003
35,40,57áâà1,57áâà2,59,59áâà1,59ª2
7700000000007120004
61ª1áâà1,61ª2,63ª2,65ª2,65ª2áâà2,65ª3
7700000000007120005
65ª3áâà4,66,66áâà1,67ª1,68,68áâà1
7700000000007120006
68áâà2,68ª2,68ª2áâà1,68ª2áâà2,68ª2áâà3
7700000000007120007
68ª2áâà4,68ª3,68ª4,68ª5,69,70áâà1,70ª1
7700000000007120008
70ª2,70ª3,70ª4,71,71ª1,71ª2áâà2,71ª3
7700000000007120009
72ª1,72ª1áâà1,72ª2,72ª3,73,74ª1,74ª2
7700000000007120010
75ª1,76,77,77ª1,77ª1áâà1,79,79áâà1
7700000000007120012
74ª2áâà2,74ª3,74ª4,74ª4áâà1,74ª4áâà2
7700000000007120013
79áâà2,79ª1,79ª1áâà1,79ª1áâà2,79ª1áâà3
7700000000007120014
4,4,5,5áâà9,5áâà19,5áâà20,5áâà21
7700000000007130001
5áâà25,5áâà32,5áâà33,5áâà34,5áâà35
7700000000007130002
5áâà36,5áâà38,5ª1,5ª2,5ª4,5ª4,5ª7,5ª8
7700000000007130003
5ª11,5ª12,5ª16,5ª17,5ª22,5ª25,5ª26
7700000000007130004
5ª27,5ª27,5ª28,6,6áâà3,6áâà7,8
7700000000007130005
1,1áâà2,2,3,4,4,4áâà1,5,6,7,7ª2,8
7700000000007140001
8áâà3,9/1,10,10áâà2,10áâà3,11,12
7700000000007140002
12áâà2,12áâà3,12áâà4,12áâà5,12áâà6
7700000000007140003
12áâà7,12áâà8,12áâà9,12ª1,12ª1áâà1
7700000000007140004
12ª1áâà2,12ª1áâà3,12ª1áâà5,12ª1áâà7
7700000000007140005
12ª1áâà8,12ª1áâà9,12ª1áâà10,12ª1áâà11
7700000000007140006
12ª1áâà12,12ª1áâà13,12ª1áâà14
7700000000007140007
12ª1áâà15,12ª1áâà16,12ª1áâà17
7700000000007140008
12ª1áâà18,12ª1áâà19,12ª1áâà20
7700000000007140009
12ª1áâà21,12ª1áâà22,12ª1áâà23
7700000000007140010
12ª1áâà24,12ª1áâà25,12ª1áâà26
7700000000007140011
12ª1áâà27,12ª1áâà28,12ª1áâà29
7700000000007140012
12ª1áâà31,12ª1áâà32,12ª1áâà33
7700000000007140013
12ª1áâà34,12ª1áâà35,12ª1áâà36
7700000000007140014
12ª1áâà37,12ª1áâà39,12ª1áâà40
7700000000007140015
12ª1áâà67,12ª2,12ª2áâà2,12ª3,12ª3áâà2
7700000000007140016
12ª3áâà3,12ª3áâà4,12ª3áâà5,12ª3áâà7
7700000000007140017
12ª3áâà8,12ª4,12ª4áâà2,13/1,14,14áâà1
7700000000007140018
15,15,16,16áâà1,16áâà2,16áâà3,16áâà4
7700000000007140019
16áâà13,16áâà15,16áâà16,16ª2,16ª2áâà3
7700000000007140020
16ª2áâà4,16ª2áâà5,16ª2áâà6,16ª2áâà7
7700000000007140021
16ª2áâà8,16ª2áâà9,16ª2áâà11,16ª2áâà12
7700000000007140022
16ª2áâà13,16ª2áâà14,16ª2áâà15
7700000000007140023
16ª2áâà16,16ª2áâà17,16ª2áâà18
7700000000007140024
16ª2áâà19,16ª2áâà20,17,17áâà2,17ª1
7700000000007140025
17ª2,17ª3,17ª4,18ª1áâà1,18ª2,18,19ª1
7700000000007140026
19ª2,19ª3,20áâà1,20áâà3,20áâà4,20áâà5
7700000000007140027
20áâà6,20áâà7,20áâà8,20áâà9,20áâà10,21
7700000000007140028
21ª1,21áâà3,21,21,22,22áâà2,22áâà3
7700000000007140029
22ª1,22áâà1,22áâà2,23áâà1,23áâà2
7700000000007140030
23áâà7,23áâà8,23áâà9,23áâà13,23áâà14
7700000000007140031
23áâà15,23áâà16,23áâà18,23áâà20
7700000000007140032
23áâà22,23áâà23,23áâà24,23áâà25
7700000000007140033
23áâà26,23áâà28,23áâà30,23áâà31
7700000000007140034
23áâà32,23áâà33,23áâà34,23áâà36
7700000000007140035
23áâà37,23áâà38,23áâà39,23áâà40
7700000000007140036
23áâà41,23áâà42,23áâà44,23áâà45
7700000000007140037
23áâà46,23áâà47,23áâà49,23áâà50
7700000000007140038
23áâà52,23áâà53,23áâà54,23áâà55
7700000000007140039
23áâà57,23áâà58,23áâà59,23áâà61
7700000000007140040
23áâà62,23áâà63,23áâà64,23áâà65
7700000000007140041
23áâà66,23áâà67,23áâà68,23áâà69
7700000000007140042
23áâà70,23áâà71,23áâà72,23áâà73
7700000000007140043
23áâà79,23áâà82,23áâà85,23áâà86
7700000000007140044
23áâà86,23áâà88,23áâà91,23áâà93
7700000000007140045
23áâà94,23áâà95,23áâà98,23áâà101
7700000000007140046
23áâà101,23áâà103,23áâà105,23áâà106
7700000000007140047
23áâà109,23áâà110,23áâà111,23áâà112
7700000000007140048
23áâà113,23áâà117,23áâà118,23áâà120
7700000000007140049
23áâà120,23áâà121,23áâà123,23áâà124
7700000000007140050
23áâà127,23áâà130,23áâà131,23áâà131
7700000000007140051
23áâà131,23áâà131,23áâà132,23áâà132
7700000000007140052
23áâà133,23áâà134,23áâà135,23áâà136
7700000000007140053
23áâà145,23áâà147,23áâà148,23áâà149
7700000000007140054
23áâà150,23áâà151,23áâà158,23áâà159
7700000000007140055
23áâà172,23áâà175,23áâà178,23áâà179
7700000000007140056
23áâà180,23áâà184,23áâà186,23áâà191
7700000000007140057
23áâà196,23áâà197,23áâà202,23áâà203
7700000000007140058
23áâà204,23áâà205,23áâà212,23áâà213
7700000000007140059
23áâà214,23áâà215,23áâà217,23áâà219
7700000000007140060
23áâà220,23áâà221,23áâà222,23áâà223
7700000000007140061
23áâà225,23áâà228,23áâà229,23áâà231
7700000000007140062
23áâà233,23áâà237,23áâà238,23áâà239
7700000000007140063
23áâà240,23áâà242,23áâà243,23áâà244
7700000000007140064
23áâà245,23áâà246,23áâà247,23áâà248
7700000000007140065
23áâà249,23áâà250,23áâà251,23áâà254
7700000000007140066
23áâà255,23áâà257,23áâà258,23áâà259
7700000000007140067
23áâà261,23áâà263,23áâà264,23áâà267
7700000000007140068
23áâà268,23áâà269,23áâà273,23áâà276
7700000000007140069
23áâà277,23áâà279,23áâà280,23áâà283
7700000000007140070
23áâà286,23áâà287,23áâà288,23áâà289
7700000000007140071
23áâà291,23áâà294,23áâà296,23áâà297
7700000000007140072
23áâà298,23áâà299,23áâà303,23áâà305
7700000000007140073
23áâà308,23áâà310,23áâà315,23áâà316
7700000000007140074
23áâà317,23áâà318,23áâà322,23áâà322
7700000000007140075
23áâà324,23áâà427,23áâà430,23áâà432
7700000000007140076
23áâà435,23áâà436,23áâà438,23áâà439
7700000000007140077
23áâà440,23áâà446,23áâà455,23áâà456
7700000000007140078
23áâà496,23áâà497,23áâà498,23áâà499
7700000000007140079
23áâà505,23áâà506,23áâà526,23áâà638
7700000000007140080
23áâà702,23áâà703,23áâà706,23áâà711
7700000000007140081
23áâà712,23áâà715,23áâà720,23áâà724
7700000000007140082
23áâà725,23áâà728,23áâà730,23áâà731
7700000000007140083
23áâà732,23áâà734,23áâà735,23áâà738
7700000000007140084
23áâà746,23áâà749,23áâà750,23áâà753
7700000000007140085
23áâà755,23áâà756,23áâà760,23áâà761
7700000000007140086
23áâà765,23áâà777,23áâà781,23áâà788
7700000000007140087
23áâà789,23áâà790,23áâà791,23áâà792
7700000000007140088
23áâà831,23áâà833,23áâà834,23áâà836
7700000000007140089
23áâà838,23áâà839,23áâà850,23áâà857
7700000000007140090
23áâà861,23áâà864,23áâà865,23áâà868
7700000000007140091
23áâà869,23áâà877,23áâà881,23áâà886
7700000000007140092
23áâà888,23áâà892,23áâà893,23áâà895
7700000000007140093
23áâà896,23áâà901,23áâà908,23áâà913
7700000000007140094
23áâà915,23áâà916,23áâà917,23áâà918
7700000000007140095
23áâà919,23áâà920,23áâà921,23áâà922
7700000000007140096
23áâà923,23áâà925,23áâà926,23áâà926
7700000000007140097
23áâà928,23áâà931,23áâà936,23áâà940
7700000000007140098
23áâà941,23áâà942,23áâà943,23áâà944
7700000000007140099
23áâà945,23áâà949,23áâà950,23áâà951
7700000000007140100
23áâà954,23áâà964,23áâà964,23áâà971
7700000000007140101
23áâà982,23áâà986,23áâà992,23áâà993
7700000000007140102
23áâà998,23ª1,23ª2,23ª3,23ª4,23ª5,23ª6
7700000000007140103
23ª7,23ª8,23ª9,23ª11,23ª12,23ª14,23ª15
7700000000007140104
24,24áâà1,24ª1,24ª1áâà2,24ª2,24,25
7700000000007140105
7700000000007140107
25áâà6,25áâà7,25áâà8,25áâà9,25áâà10
7700000000007140108
25áâà11,25áâà12,25áâà13,25áâà14
7700000000007140109
25áâà15,25áâà16,25áâà18,25áâà19
7700000000007140110
7700000000007140111
25áâà28,25ª1,25ª1áâà2,25ª1áâà3,25ª2
7700000000007140112
2áâà1,3,3áâà2,4ª1,4ª1áâà2,4ª1áâà3
7700000000007150001
4ª1áâà4,5,5áâà10
7700000000007150002
2,3,3,4áâà1,4áâà2,5,5áâà2
7700000000007160001
4,4áâà1,4áâà3,4ª1,4ª1áâà1
7700000000007170001
18,20ª1,20ª2,20ª2áâà1,20ª2áâà2,22áâà1
7700000000007200001
117303
45293562000
22áâà2,22áâà3,22áâà5
7700000000007200002
15,15áâà1,15,17,17ª1,17ª2,19,19ª1,21
7700000000007200003
117452
23,24,24áâà1,24ª1,24ª1áâà1,24ª1áâà2
7700000000007200004
24ª2,24ª2áâà1,24ª2áâà2,24ª2áâà3,24ª3
7700000000007200005
24,25ª1,25ª1áâà1,25ª2,25ª3,25ª4,27,28
7700000000007200006
7700000000007200007
28áâà6,28áâà7,28áâà8,28ª1áâà1,28ª2áâà1
7700000000007200008
28áâà1,28áâà2,29ª1,29ª2,29ª2áâà1,31
7700000000007200009
32,32,32áâà1,32áâà1,33ª1,33ª2,33ª3
7700000000007200010
35ª1,35ª2,35ª2áâà1,35ª3,37ª1,37ª2,37ª3
7700000000007200011
39ª1,39ª2,41
7700000000007200012
4,4áâà1,6ª1,6ª2,6ª3,6ª3áâà1,7áâà2,7ª1
7700000000007200013
117149
7ª2,7ª2áâà2,8,9ª1,9ª2,10,11ª1,12ª1
7700000000007200014
12ª2,12ª3,13,14,16
7700000000007200015
1,1áâà1,1áâà2,1áâà3,1,2,2áâà1,2áâà2
7700000000007210001
117593
7728
45293598000
2,2áâà1,2áâà2,3áâà1,5ª1,5ª1áâà2
7700000000007210002
5ª1áâà3,6ª1,6ª1áâà1,6ª1áâà2,6ª2,6ª3
7700000000007210003
26,28,28áâà2,28áâà3,28áâà4,28áâà5
7700000000007230001
28áâà6,38,38áâà1,38áâà3,38áâà4,38áâà5
7700000000007230002
38áâà11
7700000000007230003
38áâà13
7700000000007230010
21,21,23,23,25,25áâà1,25,27,29,29
7700000000007230004
29,31ª1,33,33áâà1,33áâà2,33áâà3,35
7700000000007230005
35áâà1,35,35,35,37,37ª2,39,39ª3,39
7700000000007230006
39,39,41/1áâà1,43ª2,45ª1,45,47áâà1
7700000000007230007
47áâà2,47ª1,47ª2,47ª2áâà1,47,47áâà1
7700000000007230009
49áâà1,49áâà2,49ª1,49ª2,49ª2áâà3,53
7700000000007230011
53,55,55,57,57,57áâà1,59/1ª
7700000000007230012
59/1ª,59/1áâà1
7700000000007230013
11,11áâà2,13,13áâà2,15áâà6,15ª1
7700000000007230014
15ª1áâà1,15ª5,17,17áâà2
7700000000007230015
32áâà1,72áâà2,72áâà3
7700000000007230016
75ª1áâà2,75ª3,77áâà2,77áâà3,77ª1
7700000000007230017
63,63,65,65áâà3,67,71,73áâà3,73ª1
7700000000007230018
73ª1áâà2,73ª2,73ª3,73ª4,73,75ª1
7700000000007230019
77ª1áâà1,77ª2,77ª3,77ª4,77ª4áâà1
7700000000007230020
77ª4áâà2,77,77áâà1,77áâà2,77áâà3
7700000000007230021
77áâà4,79ª1,79ª1áâà1,79ª2,79ª2áâà3
7700000000007230022
79ª3,79ª4,81áâà1,81áâà2,83
7700000000007230023
72áâà1
7700000000007230024
4,4áâà1,4áâà2,5,5áâà2,5áâà3,5áâà4,5
7700000000007230025
6áâà2,6ª1,6ª2,6,6áâà1,8ª1,8ª1áâà2
7700000000007230026
8ª2,9ª1,9ª1áâà2,9/20,10/13,12/18ª1
7700000000007230027
12/18ª2,14,18,18áâà2,18ª2,18,18,20
7700000000007230028
20,20áâà8,20,20áâà1,22,22ª7,22
7700000000007230029
22,24,24áâà1,24ª1,24ª2,24ª3,24
7700000000007230030
24áâà2,24áâà3
7700000000007230031
7700000000007230008
44áâà3,44áâà4,44áâà5,44áâà6,44ª1,44ª2
7700000000007230032
3ª1,3ª1áâà2,3ª2,3ª3,5,7,11
7700000000007250001
125057
45277589000
8,8,8/2,10ª1,10ª2,10ª3,10ª4,10ª5
7700000000007250002
125080
10ª6,12ª1,12ª2,12ª3,12ª4
7700000000007250003
13ª1,13ª2,13ª2áâà1,15,15áâà2,15áâà5
7700000000007250004
125252
15áâà6,17áâà3,17ª1,17ª2,19ª1,19ª2,21ª1
7700000000007250005
21ª2,25áâà2,25áâà3,25/37,27áâà1,27áâà2
7700000000007250006
7700000000007260001
1,1áâà2,4,4áâà2,19áâà2,19_25,27,27áâà1
7700000000007270001
13,14
7700000000007290001
117624
1,2,2áâà1,2áâà2,3,3ª2,4,5,5áâà2,7
7700000000007310001
121374
7731
45268597000
7áâà2,9áâà1,9áâà2,9áâà3,13ª1,13ª2
7700000000007310002
13ª2áâà3,15ª2,15ª3,16,17,19,22áâà1
7700000000007310003
1áâà1,5,7,7áâà1,7áâà3,9ª1,9ª1áâà1,9ª2
7700000000007320001
107065
45263564000
9,11,11áâà2,13,13áâà1,13áâà2,13,15
7700000000007320002
15áâà1,15áâà2,17ª1,17ª2,17ª2áâà1,17
7700000000007320003
19,19áâà1,19áâà3
7700000000007320004
2,2áâà2,2,4,4áâà2,6,6,8,10,10
7700000000007320005
107207
10áâà2,12,12áâà1,14,14áâà1,16,18,18
7700000000007320006
20,20áâà1,21,21áâà1,21áâà2,21áâà3,22
7700000000007320007
107589
24,25,26,26,27,27áâà1,29,29áâà1
7700000000007320008
29áâà2,29,31,32,33/7,33/7áâà1
7700000000007320009
33/7áâà3,34,34áâà1,34áâà2,34áâà3,34
7700000000007320010
27áâà3,27áâà4,27áâà5,27áâà6
7700000000007330010
127106
45280574000
1,1ª1,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000007330001
3áâà6,3áâà7,3,5,5,7,7áâà1,9,11,11ª2
7700000000007330002
11ª2áâà1,11ª3,11ª3áâà1,11ª4,13ª1,13ª2
7700000000007330003
13ª2áâà1,13ª2áâà2,13ª3,13ª3áâà1
7700000000007330004
13ª4áâà1,13ª4áâà2,13ª4áâà3,13ª4áâà4
7700000000007330005
13ª4áâà5,13ª5,13,19,19áâà1,23áâà1
7700000000007330006
7700000000007330007
7700000000007330008
23,27,27áâà1,27,27áâà1,27áâà2
7700000000007330009
27áâà7,27áâà8,27áâà9,27áâà10
7700000000007330011
27áâà11,27áâà12,27áâà13,27áâà14
7700000000007330012
27áâà15,27áâà17,27áâà18,27áâà19
7700000000007330013
27áâà21,27áâà25,27áâà43,27áâà44
7700000000007330014
27áâà1,27áâà2
7700000000007330015
2,2áâà1,2áâà2,2áâà3,2ª1,2,2áâà1,4
7700000000007330016
127273
4áâà1,4áâà2,4áâà3,4
7700000000007330017
42,44
7700000000007330018
127566
72,74,74áâà1,74áâà2,74áâà3,78,78áâà2
7700000000007330019
127349
45280558000
78áâà3,80,80áâà1,82,82áâà1,82áâà2,84
7700000000007330020
86,86áâà1,86áâà2,86ª1,86,88,88áâà1
7700000000007330022
88áâà2,88,90,92,92áâà1,92áâà2,92ª2,94
7700000000007330023
96,96áâà1,98áâà2,98ª1,98ª2,100,100áâà1
7700000000007330024
100áâà2,102ª2áâà1,102ª2áâà2,102,102
7700000000007330025
37áâà22,37áâà23,37áâà24,37áâà25
7700000000007330026
127410
45280554000
37áâà26,37áâà27,37áâà28,37áâà29,43áâà1
7700000000007330027
43áâà2,43áâà3,43áâà4,43áâà5,43áâà6
7700000000007330028
43áâà7,43áâà8,43áâà9,43áâà10,43áâà11
7700000000007330029
43áâà12,43áâà13,43áâà14,43áâà15
7700000000007330030
43áâà16,43áâà17,43áâà18,43áâà19
7700000000007330031
43áâà20,43áâà21,43áâà22,43áâà23
7700000000007330032
43áâà24,43áâà25,43áâà26,43áâà27
7700000000007330033
43áâà28,43áâà29,43áâà30,43áâà31
7700000000007330034
43áâà32,43áâà33,43áâà34,47,47áâà1
7700000000007330035
47áâà2,47áâà3,47áâà4,47áâà5,47áâà6,51
7700000000007330036
51áâà1,51áâà2,51áâà3,51áâà4,51áâà5
7700000000007330037
51áâà6,51áâà7,51áâà8,51,53áâà1,53áâà2
7700000000007330038
53áâà3,53áâà4,53áâà5,53áâà6,53áâà7
7700000000007330039
53áâà8,53áâà9,53áâà10,53áâà11,53áâà12
7700000000007330040
53áâà13,75áâà13,75,77,77áâà1,77,77
7700000000007330041
79,79áâà1,79áâà2,79áâà3,79áâà4
7700000000007330042
79áâà5,79áâà6,79áâà7,79áâà8
7700000000007330043
79áâà9,79áâà10,79áâà11,79áâà12
7700000000007330044
79áâà13,79áâà14,79áâà15,79áâà25
7700000000007330045
79áâà1,79áâà2,79áâà3,79áâà4
7700000000007330046
79áâà5,79áâà6,79áâà7,79áâà8
7700000000007330047
79áâà10,79áâà11,79
7700000000007330048
79,79áâà3,79
7700000000007330049
29,29áâà1,29áâà2,29áâà3,29áâà4,29áâà1
7700000000007330050
29áâà4,29áâà6,29,29áâà1,29áâà2
7700000000007330051
29áâà3,29áâà4,29áâà5,29áâà6
7700000000007330052
29áâà7,29áâà8,29,29áâà1,29áâà2
7700000000007330053
29áâà3,29áâà4,29áâà5,29áâà6
7700000000007330054
29áâà7,29,29,31,31áâà1,31áâà2
7700000000007330055
31áâà4,31áâà5,31áâà6,31áâà7,31áâà8
7700000000007330056
31áâà9,31ª1,31áâà1,31áâà2,31áâà3
7700000000007330057
31áâà4,31áâà5,31áâà7,31,31áâà1
7700000000007330058
31áâà2,31áâà4,31,31áâà2,31áâà3
7700000000007330059
31áâà4,31áâà5,31áâà9,31áâà10
7700000000007330060
31áâà1,31áâà1,31áâà2,31áâà3
7700000000007330061
31áâà4,31áâà5,33áâà1,33áâà2,33
7700000000007330062
33áâà1,33áâà2,33áâà3,33áâà4
7700000000007330063
33áâà5,33áâà6,33áâà7,33áâà8
7700000000007330064
33áâà12,33,33áâà1,33,33áâà1
7700000000007330065
33áâà2,33áâà3,33,33áâà1,33áâà2
7700000000007330066
33,35áâà1,35áâà2,35,35áâà1,35áâà2
7700000000007330067
35áâà3,35áâà6,35áâà8,35áâà1
7700000000007330068
35áâà2,35áâà3,35áâà4,35áâà5,37áâà1
7700000000007330069
37áâà2,37áâà3,37áâà4,37áâà5,37áâà6
7700000000007330070
37áâà7,37áâà8,37áâà9,37áâà10,37áâà11
7700000000007330071
37áâà12,37áâà13,37áâà14,37áâà15
7700000000007330072
37áâà16,37áâà17,37áâà20,37áâà21
7700000000007330073
37áâà30,37áâà31,37áâà32,37áâà33
7700000000007330074
37áâà34,37áâà35,37áâà41,37áâà42,37ª1
7700000000007330075
37ª1áâà1,37ª1áâà2,37ª1áâà3,37,37áâà1
7700000000007330076
37áâà2,37áâà3,37áâà4,37áâà5,37,41
7700000000007330077
41áâà1,41áâà3,41áâà4,41áâà6,41áâà1
7700000000007330078
41áâà2,41áâà3,41áâà4,41áâà5,43
7700000000007330079
52,52,56,56áâà1,56áâà2,56,56,56,58
7700000000007330080
127549
58,58,60,60áâà1,60ª2,60ª2áâà1,60
7700000000007330081
60,62,62áâà2,62,62áâà1,62,64
7700000000007330082
64áâà1,64,64,64áâà1,66áâà1,66/2
7700000000007330083
50,50áâà1
7700000000007330084
45280594000
6,8,8,8áâà1,8,10,12,12ª1,12,12,14
7700000000007330085
127562
14áâà1,14,16,18,18áâà1,18áâà2,18ª1
7700000000007330086
18ª2áâà1,18,18áâà1,18,18,18
7700000000007330087
18áâà1,18,18,20,20,22,22,22
7700000000007330088
22áâà1,24,24áâà2,24ª1áâà1,24,24
7700000000007330089
24áâà1,24,26,26,26áâà2,26,26,28
7700000000007330090
28,28áâà1,30,30áâà2,30ª1áâà1,30,30
7700000000007330091
30,30,32,32áâà1,34ª2,34,34,34,36
7700000000007330092
38,38ª1,40,40áâà1,40áâà2,40áâà4,40áâà5
7700000000007330093
40ª1,40,40,40,40,42,42áâà2,42,42
7700000000007330094
147áâà4,147áâà5,147,149áâà1,149áâà2
7700000000007330095
93,93áâà1,93áâà2,93ª1,93ª2,93,95,95ª1
7700000000007330096
95,95áâà1,95áâà2,95áâà3,97,97áâà1
7700000000007330097
97áâà2,97ª1,97ª2,97ª3,97,97,147áâà1
7700000000007330098
149áâà3,149áâà4,149áâà5,149áâà6
7700000000007330100
81
7700000000007330021
48ª1,48ª1áâà1,48ª1áâà2,48ª2,48ª3
7700000000007330101
81,81,81,83,83,85,85áâà1,85áâà2
7700000000007330102
85áâà3,87,87ª1,87ª2,87ª3,87ª4,87/89
7700000000007330103
89,89áâà1,89áâà2,89,89áâà1,89,89
7700000000007330104
4,4áâà1,13,15,15áâà2,15áâà3,17áâà1
7700000000007340001
107258
45263552000
17ª1,17ª2
7700000000007340002
7700000000007350001
107392
45263594000
1,2,4áâà4,4ª1,4ª2,4ª3,6,7/33áâà1
7700000000007360001
121309
45268595000
7/33áâà2,7/33áâà3,7/33áâà4,7/33áâà5
7700000000007360002
7/33áâà7,7/33áâà8,7/33áâà9,7/33áâà10,8
7700000000007360003
5ª1,5ª2,7ª,7ª,7ª3
7700000000007370001
125315
2,2áâà2,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5
7700000000007370002
7700000000007380001
4áâà1,4áâà2,4áâà3,4áâà4,6,8,8áâà1
7700000000007380002
8áâà2,8áâà3,8áâà6,8áâà7,9,10,10áâà2
7700000000007380003
10áâà5,10áâà9,10áâà11,11,12áâà1
7700000000007380004
12áâà2,12áâà3,13,14áâà1,15,16áâà1,17
7700000000007380005
18,18áâà1,18áâà2,18áâà3,19,21/8
7700000000007380006
23áâà1,23áâà2,23áâà3,23áâà4
7700000000007380007
1áâà1,1ª1,1ª2,2áâà1,2áâà2,2áâà3,2áâà4
7700000000007410001
129343
45280580000
7700000000007410002
7700000000007410003
2áâà16,2áâà17,2áâà18,2áâà19,2áâà20
7700000000007410004
2áâà23,2áâà27,2áâà31,3ª1,3ª2,3ª3,5,5ª2
7700000000007410005
6áâà1,6áâà2,7,7áâà2,7áâà3,7áâà4,8
7700000000007410006
8áâà1,8ª1,9,9áâà1,10,10áâà2,10ª2,11
7700000000007410007
11ª1,11ª2,11ª3,12,12áâà1,12áâà2,12áâà3
7700000000007410008
13,13ª1,13ª2,13ª2áâà1,13ª3,13ª3áâà2,14
7700000000007410009
14ª1,14,15ª1,15ª2,15ª3,15ª3áâà1,16ª1
7700000000007410010
16ª2,17ª1,17ª2,17ª2áâà1,17ª2áâà2,19
7700000000007410011
21áâà1,21áâà2,21
7700000000007410012
6,8,10,12,12,14,16áâà1,16áâà2,16ª1,18
7700000000007420001
105122
20,22ª1,22,22áâà2,22áâà3,22áâà4
7700000000007420002
1áâà1,1áâà2,1áâà3,1áâà4,1áâà5
7700000000007420003
107241
1áâà6,1áâà8,1áâà9,1áâà10,1áâà11
7700000000007420004
1áâà12,1áâà13,1,1áâà1,1áâà2
7700000000007420005
1áâà3,1áâà4,1áâà5,1áâà6,1áâà1,19
7700000000007420006
7700000000007420007
19áâà5,21,21ª1,21ª2,21ª3,21ª3áâà1
7700000000007420008
23ª1,23ª2,23ª3,23,25ª1,25ª3,25,26
7700000000007420009
26áâà1,27,27áâà1,27,27áâà3,28,29,30
7700000000007420010
31,31áâà1,31áâà2,32,34,36,36áâà1,38,40
7700000000007420011
42,44áâà4,44ª1,44ª2,46,46áâà1,48,50ª1
7700000000007420012
52,52ª1,54,56,58,60,62,62,62áâà1
7700000000007420013
62áâà1,64,64,66,68,70,72,74,76ª1
7700000000007420014
7áâà4,7áâà6,7áâà7,9/6áâà3,9/6áâà4
7700000000007420015
107497
3áâà1,3áâà2,3áâà2,3áâà3,3áâà4,3áâà5
7700000000007420016
7700000000007420017
7700000000007420018
7700000000007420019
3áâà22,3áâà23,3áâà24,3áâà24,3áâà24
7700000000007420020
3áâà25,3áâà26,3áâà27,3áâà27,3áâà27
7700000000007420021
3áâà28,3áâà29,3áâà30,3áâà31,3áâà32
7700000000007420022
3áâà33,3áâà1,5áâà1,5áâà2,5áâà3,5áâà4
7700000000007420023
5áâà5,5áâà6,5áâà7,5áâà8,5áâà9,5áâà18
7700000000007420024
5áâà20,5ª1,5ª3,5,7áâà1,7áâà2,7áâà3
7700000000007420025
9/6áâà5,9/6áâà6,9/6áâà7,9/6áâà8
7700000000007420026
9/6áâà9,9/6áâà10,9/6áâà11,9/6áâà12
7700000000007420027
9/6áâà13,9/6áâà14,9/6áâà15,9/6áâà16
7700000000007420028
9/6áâà16,9/6áâà17,9/6áâà18,9/6áâà19
7700000000007420029
9/6áâà20,9/6áâà21,9/6áâà22,9/6áâà23
7700000000007420030
9/6áâà24,9/6áâà25,9/6áâà27,9/6áâà28
7700000000007420031
9/6áâà29,9/6áâà30,9/6áâà31,9/6áâà32
7700000000007420032
9/6áâà34,9/6áâà36,9/6áâà37,11áâà1
7700000000007420033
15/1áâà1,15/1áâà2,15/1áâà3,15/1áâà4
7700000000007420034
15/1áâà5,15/1áâà6,15/1áâà7,15/1áâà9
7700000000007420035
15/1áâà13,15/1áâà14,15/1áâà15,15
7700000000007420036
7700000000007420037
17áâà6
7700000000007420039
7700000000007420040
107553
7700000000007420041
1áâà13,1áâà14,1áâà17,1áâà18,1áâà19
7700000000007420042
1áâà20,1áâà21,1áâà22,1áâà23,1áâà23
7700000000007420043
1áâà30,1,2áâà1,2áâà2,2áâà3,2áâà4
7700000000007420044
7700000000007420045
2áâà11,2áâà12,2áâà23,2áâà1,2áâà2
7700000000007420046
2áâà3,2áâà4,2áâà5,2áâà6,2áâà10
7700000000007420047
2áâà11,2áâà1
7700000000007420048
6,13,15/1,17,17/1
7700000000007430001
129327
45280556000
6,8,8áâà1,8ª1,8ª3,8,10ª2,10,12
7700000000007430002
45280565000
12,14ª1,14áâà1,16,18,19/2,20,21,23
7700000000007430003
23áâà1,25ª1,25ª2,27,29,31/1
7700000000007430004
áâà8,6,51,51áâà1,51áâà3,51ª1,51ª2
7700000000007430005
129336
7700000000007430006
12áâà6,12áâà7,12áâà10,12áâà12,12áâà13
7700000000007430007
53áâà1,55,57,57áâà2,59,59áâà1,61,63
7700000000007430009
63áâà2,63áâà3,63áâà4,64,65,67,69
7700000000007430010
69áâà1,69áâà2,71,73,75,75áâà1,77
7700000000007430011
79áâà1,79áâà2,79áâà3
7700000000007430012
1,1,3,5ª1,5ª2,7,7ª2,7ª3,9,11
7700000000007430013
129344
35,37,37áâà2,39ª1,39ª2,41,43,45/2,47ª1
7700000000007430014
129346
47ª1áâà1,47ª1áâà2,47ª1áâà4,47ª1áâà5
7700000000007430015
47ª2,47ª3,49,49ª2
7700000000007430016
4,10áâà1
7700000000007440001
115093
7705
45286560000
3,5,5áâà2,5áâà4,7
7700000000007440002
28áâà1,28áâà8,28áâà10,28ª1,28ª2,28ª3
7700000000007440003
115162
28ª4,28ª5,28ª6,28ª7
7700000000007440004
7700000000007440005
7700000000007440006
7700000000007440007
23áâà16,23áâà17,23áâà18,23áâà20,27áâà2
7700000000007440008
27áâà3,27áâà4,27áâà7,27áâà8,27áâà12
7700000000007440009
27áâà20,27áâà31,27áâà40,27ª1,27ª38
7700000000007440010
28,35,35áâà1,35áâà2,35áâà3
7700000000007450001
107564
23,25/33,25/33áâà3
7700000000007470001
3/11áâà1,5áâà1,5áâà2,6,7/14áâà1
7700000000007470002
7/14áâà2,7/14áâà3,8,11/13,13áâà2,17
7700000000007470003
17,18/6áâà1,20,20áâà2,20áâà3,20áâà4
7700000000007470004
15,20/8áâà2,20/8áâà5,21/20,24
7700000000007480001
4áâà1,4áâà2,4áâà3,5,5/9,6áâà1,6áâà2
7700000000007490001
6ª2,7,8,10áâà1,10áâà2,10áâà3,10áâà5
7700000000007490002
10áâà6,10áâà8,10áâà9,10áâà10,10áâà11
7700000000007490003
10áâà12,10áâà13,10
7700000000007490004
8,8áâà2,10,10ª1,10ª3,10,18ª1,18ª2
7700000000007500001
18ª3,18ª4,18ª5,18ª6,18ª7,18ª8,20áâà1
7700000000007500002
20áâà2,20áâà3,20áâà4,20áâà5,20áâà6
7700000000007500003
20áâà7,20áâà1,20áâà2,20áâà3,20
7700000000007500004
13/32,13,15,15áâà3,15áâà4,15áâà5,17ª1
7700000000007500005
115470
17ª1áâà3,17ª1áâà5,17ª2,17ª3,17ª4,17ª5
7700000000007500006
19,19áâà2,19,21,21,21,21áâà1
7700000000007500007
21áâà2,21,23
7700000000007500008
39,39áâà1,39áâà2,39áâà3,39áâà4,39áâà5
7700000000007500009
39áâà6,39áâà7,39áâà8,39áâà9,39áâà10
7700000000007500010
39áâà11,39áâà12,39áâà13,39áâà14
7700000000007500011
39áâà15,39áâà17,39áâà18,39áâà19
7700000000007500012
39áâà20,39áâà25,39áâà26,39áâà27
7700000000007500013
39áâà28,39áâà29,39áâà30,39áâà31
7700000000007500014
39áâà32,39áâà33,39áâà34,39áâà36
7700000000007500015
39áâà37,39áâà38,39áâà40,39áâà41
7700000000007500016
39áâà42,39áâà43,39áâà44,39áâà45
7700000000007500017
39áâà46,39áâà47,39áâà48,39áâà49
7700000000007500018
39áâà50,39áâà51,39áâà52,39áâà53
7700000000007500019
39áâà54,39áâà55,39áâà56,39áâà57
7700000000007500020
39áâà58,39áâà59,39áâà60,39áâà61
7700000000007500021
39áâà62,39áâà63,39áâà64,39áâà65
7700000000007500022
39áâà66,39áâà67,39áâà68,39áâà69
7700000000007500023
26,28,28ª2,28,28,30,30áâà2,30áâà3
7700000000007500024
36ª2áâà2,36ª2áâà3,36ª2áâà4,36ª2áâà6
7700000000007500025
36ª2áâà7,36ª2áâà11,36ª2áâà13,36ª3
7700000000007500026
36ª3,38,38áâà2,38áâà3,38ª2,38ª2áâà2
7700000000007500027
38ª3,38ª3áâà2,38ª3áâà3,38ª4,38ª4áâà2
7700000000007500028
38ª4áâà3,38ª5áâà1,38ª5áâà3,38ª5áâà4
7700000000007500029
38ª5áâà5,38ª5áâà9,38ª5áâà10,38ª5áâà11
7700000000007500030
38ª5áâà12,38ª5áâà15,38ª5áâà16
7700000000007500031
38ª5áâà21,38ª5áâà21,38ª5áâà25
7700000000007500032
38ª5áâà29,40,40áâà1,40ª2,40ª2áâà2,40ª3
7700000000007500033
42ª1,42ª1áâà2,42ª2,44ª2,44ª2áâà2,46ª1
7700000000007500034
46ª2,46ª3,46ª4,48,48áâà2,48áâà4,48áâà6
7700000000007500035
9,9,9áâà1,9áâà2,11ª2,11ª2áâà2
7700000000007500036
25áâà1,25áâà2,25áâà3,27,27áâà1,29
7700000000007500037
29áâà2,29áâà3,29ª2,29ª2áâà2,31,31ª2
7700000000007500038
31ª2áâà2,31ª3,31ª4,31ª5,33,33ª2,33ª3
7700000000007500039
35,35ª2,35ª2áâà2,35ª3,35,37,37ª2
7700000000007500040
11ª2áâà3,11,11
7700000000007500041
6áâà1,6áâà2
7700000000007500042
22,22áâà2,22áâà3,22áâà4,22áâà5,22/30
7700000000007500043
58,58áâà1,60,60áâà1
7700000000007500044
48áâà9,50ª1,50ª2,50ª3,58
7700000000007500045
1,1áâà2,2,3,3áâà1,4,5,5/7,6,6áâà2,7ª1
7700000000007510001
7ª2,8,8áâà2,9,17áâà1,17áâà2,17áâà3
7700000000007510002
17áâà4,17áâà5,21,21áâà1,21áâà2,21áâà3
7700000000007510003
21áâà4,23,25áâà1,25áâà2,25áâà3,25áâà4
7700000000007510004
7700000000007510005
7700000000007520001
1áâà7,1áâà9,1áâà10,1áâà11,1áâà12
7700000000007520002
7700000000007520003
1áâà19,1áâà20,1áâà21,1áâà22,1áâà23
7700000000007520004
1áâà24,1áâà25,1áâà26,1áâà27,1áâà28
7700000000007520005
2áâà1,2áâà2,3áâà1,3áâà2,3áâà3,3áâà4
7700000000007520006
3áâà5,3áâà6,3áâà7,3áâà8,17áâà1
7700000000007520007
17áâà2,17áâà3,17áâà4,17áâà5
7700000000007520008
17áâà6,17áâà7,17áâà8,17áâà9
7700000000007520009
1/14,3áâà3
7700000000007530001
5ª1,5ª2,5ª2áâà1,5ª3,5ª3áâà1,5ª3áâà2
7700000000007540001
119571
45268592000
5ª4,7,7áâà1,7áâà2,9,9áâà1,9ª1,9,11
7700000000007540002
11ª1,11,13,13áâà1,46áâà,46ª1,46ª2
7700000000007540003
46ª3,48,50,52,54,54áâà,56,56áâà,58
7700000000007540004
áâà2,2áâà8,2áâà9,2áâà10,2áâà11,2áâà15
7700000000007540005
119602
2ª1,2ª1áâà1,2ª1,2ª1áâà1,2ª1áâà2
7700000000007540006
2ª1,2ª2,2ª2,2ª3,2ª3áâà1,2ª3áâà2,2ª3
7700000000007540007
2ª4,2ª4áâà1,2ª5,2ª6,2ª7,2ª9,4ª1
7700000000007540008
4ª1áâà2,4ª2,4ª2áâà1,4ª3,4ª3áâà1,4ª4
7700000000007540009
58áâà3,58ª1,58ª2,60,60áâà,60áâà1,62
7700000000007540010
64,64áâà,64áâà1
7700000000007540011
6ª1áâà3,6ª2,6ª2áâà1,6ª2áâà2,6ª3,6ª4
7700000000007540012
4ª4áâà1,4ª5,4ª6,6áâà1,6ª1,6ª1áâà1
7700000000007540013
6ª5,6ª6,8ª1,8ª1áâà1,12ª1,12ª1áâà1,12ª2
7700000000007540014
12ª3,12ª4,12ª5,12,19ª2,20,20ª,22ª1
7700000000007540015
22ª1áâà1,22ª2,24,26,26ª1,26ª1áâà1,26ª2
7700000000007540016
26ª3,26ª4,26ª4áâà2,26ª5,28ª1,28ª2,30
7700000000007540017
30áâà3,30ª1,30ª2,30ª2áâà1,30ª2áâà2
7700000000007540018
30ª3,30ª3áâà1,30ª3áâà2,30ª3áâà3,30ª4
7700000000007540019
32,32áâà1,34ª1,34ª1áâà1,34ª1áâà2,34ª2
7700000000007540020
34ª3,36,38,38ª1,38ª2,38ª3,38ª3áâà1
7700000000007540021
2,4ª1,4ª1áâà1,4ª2,4ª2áâà1,4,6,6
7700000000007550001
117279
45293566000
6áâà1,8,10
7700000000007550002
1,1áâà1,1áâà2,3,3áâà1,3,5ª1,5ª2
7700000000007550003
117342
5ª2áâà1,5ª2áâà2,5ª3,5ª4,5ª4áâà1,5ª5
7700000000007550004
5ª5áâà1,5,7,7áâà1,7ª1,7ª2,11,11áâà1
7700000000007550005
4,4áâà2
7700000000007560001
1/18ª2,2áâà1,3,3áâà2,5áâà3,5ª2,5ª6áâà2
7700000000007560002
123317
6áâà1,6áâà2,6áâà3,6áâà4,6áâà5,7,8áâà1
7700000000007560003
8áâà2,9,11,13áâà1,13áâà2,13áâà3,13áâà4
7700000000007560004
13áâà6,15áâà1,15áâà2,15áâà3,15áâà4
7700000000007560005
15áâà6,15áâà8,15áâà12,15áâà14,15áâà15
7700000000007560006
7700000000007560007
3áâà2,3/22,4áâà1,4áâà2,4áâà3,4áâà4
7700000000007570001
4áâà5,4áâà6,4áâà7,4áâà8,5/21,7,8,8/2
7700000000007570002
8/2áâà2,9,10/1,11,13_15,13_15áâà2,15
7700000000007570003
10,12áâà1,12áâà2,16/2áâà1,16/2áâà2
7700000000007580001
119002
45286552000
16/2áâà3,17,18áâà1,18/1áâà2,19,19áâà2
7700000000007580002
20,21áâà1,22/2áâà1,22/2áâà4,23áâà1
7700000000007580003
23áâà2,25/36,26,26áâà2,27/47,28/1
7700000000007580004
28/1áâà1,28/1áâà2,29,30/3áâà1,30/3áâà2
7700000000007580005
30/3áâà3,31,31áâà2,32,33,34,34áâà1,35
7700000000007580006
36/2áâà1,36/2áâà3,36/2áâà6,37/2áâà1
7700000000007580007
37/2áâà2,37/2áâà3,37/2áâà4,38/1áâà1
7700000000007580008
38/1áâà2,40,40áâà2,40áâà3,41áâà1
7700000000007580009
41áâà2,42áâà1,42áâà3,42áâà4,43,43áâà2
7700000000007580010
43áâà3,44áâà1,44áâà2,44áâà3,45/24
7700000000007580011
46áâà1,46áâà2,46áâà3,46áâà4,46áâà5
7700000000007580012
46áâà6,46áâà7,47/23,48áâà1,49,51áâà1
7700000000007580013
51áâà2,51áâà3,51áâà8,52áâà1,53áâà1
7700000000007580014
53áâà6,54/2áâà1,54/2áâà2,54/2áâà3
7700000000007580015
1,2/1,4áâà1,4áâà3,4áâà4,6/2,9áâà1
7700000000007580016
119019
9áâà2,11,13,15/43
7700000000007580017
7700000000007590001
7700000000007590002
2áâà13,2áâà14,2áâà15,2áâà16,2áâà18
7700000000007590003
2áâà20,2áâà21,2/28áâà1,2/28áâà2
7700000000007590004
áâà7,2ª1,2ª1áâà2,2ª2,3ª1,3ª1áâà1,3ª2
7700000000007630001
129075
45280572000
3áâà1,4,4áâà6,4,5,6ª1,6ª2,7,8,10áâà2
7700000000007630002
10ª1,10ª2,12,12áâà2,12ª2áâà1,12ª2áâà2
7700000000007630003
12ª2áâà3,12ª3,14,14áâà2,14áâà3,16,16ª2
7700000000007630004
16ª3,18
7700000000007630005
3áâà1,6áâà1,6áâà8
7700000000007640001
109004
1/8áâà1,1/8áâà2,1/8áâà3,2áâà1,2áâà2
7700000000007660001
2áâà4,3áâà11,3_5áâà1,3_5áâà1,3_5áâà2
7700000000007660002
3_5áâà3,3_5áâà4,3_5áâà9,3_5áâà10
7700000000007660003
3_5áâà22,3_5áâà30,3_5áâà31,3_5áâà32
7700000000007660004
11/2áâà1,11/2áâà1
7700000000007660005
1,2,3,4ª1,4ª2,5,6,6áâà1,6áâà2,6ª2,6ª3
7700000000007670001
121357
7,7ª1,7ª2,8ª1,8ª2,9áâà3,9ª1,9ª2,10,11
7700000000007670002
11áâà2,11ª2,12áâà3,12ª1,12ª2,13,13ª1
7700000000007670003
13ª2,14áâà5,14ª1,14ª2,16ª1,16ª3,18ª1
7700000000007670004
18ª2,19,19áâà2,20
7700000000007670005
2ª1,2ª2,2ª2áâà2,2ª2áâà3,2,4ª1,4ª2,6,8
7700000000007680001
9,9áâà2,9ª1,9ª1áâà2,9ª1áâà3,11,11áâà1
7700000000007680002
11áâà2,11áâà4,11áâà5
7700000000007680003
1,1áâà2,1,3,3áâà3,3ª2,3ª2áâà2,3,5
7700000000007680004
5ª1,5,7ª1,7ª2,7ª3,7ª3áâà2,7ª4,7ª5,7ª6
7700000000007680005
2ª1,2ª2,2ª2áâà2,2,3ª1,3ª2,3ª3,3,4,4
7700000000007710001
117437
4áâà1,5ª1,5ª2,5ª3,5ª3áâà1,6,6áâà2,7,8
7700000000007710002
8áâà1,8áâà2,8áâà1,9,9áâà2,9ª1,11,12ª1
7700000000007710003
12ª1áâà1,12ª1áâà2,12ª2,13,13áâà1,14ª1
7700000000007710004
14ª2,15,16,16áâà1,17,17áâà1,18,18áâà1
7700000000007710005
18áâà2,20,20áâà1
7700000000007710006
8,8áâà2,8
7700000000007720001
2,2áâà3,6
7700000000007720002
1ª1,1ª2,1ª3,1ª4,1ª4áâà1,3,3áâà2,5,5
7700000000007740001
127206
5,7áâà1,7áâà2,7,7,9ª1,9ª2,9,9
7700000000007740002
9áâà1,11ª1,11ª2,11ª3,11ª4,11,13,15
7700000000007740003
15ª2,15,15,15áâà2
7700000000007740004
4,4áâà3,4áâà5,6,6áâà2,6ª1
7700000000007740005
127422
1,3,4,4áâà1,4ª1,4ª1,4ª2,5
7700000000007750001
3,4,4,4,4áâà1,7
7700000000007760001
107076
4áâà2,7,7áâà1,8áâà2,14/34áâà1,14/34áâà2
7700000000007770001
1,2áâà1,2áâà2,2áâà3,3,4áâà1,4áâà2,5,6
7700000000007780001
125363
45283593000
7,7áâà1,7ª1áâà1,8,9,9áâà2,10ª1,10ª2,11
7700000000007780002
12ª1,12ª2,14,15,15áâà1,15ª1,15ª1áâà1
7700000000007780003
16,16ª1áâà7,18
7700000000007780004
1,1áâà2,1áâà3,5,5áâà2,5,6,6áâà5,6áâà6
7700000000007790001
1/7,2/5,2,3,4,4áâà1,4,4,5,6,7,8
7700000000007800001
119027
45268552000
8áâà1,8áâà2,8,10/13
7700000000007800002
1/8áâà1,1/8áâà3,3,4,4áâà1,6,6áâà3
7700000000007810001
25/16,27,27,29ª1,29ª2,29ª2áâà1,29ª3
7700000000007820001
129281
29ª4,29ª4áâà2,31,31áâà1,31ª2,31,33
7700000000007820002
33ª1,33ª2,33ª2áâà1,33ª3,33ª4,33ª5,33
7700000000007820003
35ª1,35ª2,37áâà2,37ª1,37ª2,37ª2áâà1
7700000000007820004
26,28áâà1,28áâà2,30áâà1,30áâà2,30áâà4
7700000000007820005
30áâà9,30áâà10,30áâà13,30áâà14,30
7700000000007820006
32ª1,32ª2,34,36,36,38ª1,38ª2,38ª2áâà1
7700000000007820007
40,42,46,46áâà2,48,48
7700000000007820008
19/1,21,22,22áâà1,23,23áâà1,23áâà2,24
7700000000007820009
7700000000007820010
7700000000007820011
7700000000007820012
1áâà18,1áâà20,1áâà21,1áâà22,1áâà23
7700000000007820013
1áâà24,1áâà25,1áâà26,1áâà27,1áâà29
7700000000007820014
1áâà30,1áâà33,1áâà33,1áâà33,1ª1
7700000000007820015
1ª1áâà2,1ª1áâà3,1ª1áâà19,1ª2áâà19,1ª3
7700000000007820016
2,2,2,3,4,4áâà1,5,5áâà1,6,6áâà2
7700000000007820017
6áâà3,6áâà4,7,7áâà2,8,8,8áâà1,9ª1
7700000000007820018
9ª2,10/1,11ª1áâà1,11/2ª1,11/2ª2,12
7700000000007820019
7700000000007820020
13áâà6,14,15,15áâà1,16ª1,16ª2,17
7700000000007820021
17áâà1,17áâà2,17ª1,18,18ª2,20,20áâà2
7700000000007820022
20áâà3
7700000000007820023
39ª1,39ª2,39ª3,41ª1,41ª2,43,43áâà2
7700000000007820024
129345
45ª1,45ª2
7700000000007820025
7700000000007840001
119049
7706
45286596000
7700000000007850001
1áâà1,1áâà2,1áâà3,1,1áâà2,1áâà3
7700000000007860001
121087
1áâà4,1,1áâà2,2,3,4,5,5áâà14
7700000000007860002
7700000000007860003
5áâà21,5áâà21,5áâà25,5áâà26,5áâà28
7700000000007860004
5áâà29,5áâà30,5áâà31,5áâà32,5áâà33
7700000000007860005
5áâà37,6,6ª2,6ª2áâà2,6,6,7ª1,7ª2,7ª3
7700000000007860006
7ª10,7ª11,7ª20,7ª20,7ª20,7ª24
7700000000007860007
7ª30,7ª31,8ª1,8ª2,10,12,12áâà2,12
7700000000007860008
12áâà4,14,16,16áâà2,16áâà3,16áâà4
7700000000007860009
7700000000007860010
16áâà10,16áâà12,16áâà14,16áâà15
7700000000007860011
16áâà18,16áâà19,16áâà20,16áâà21,18
7700000000007860012
1,1áâà2,3ª1,4,5,6ª1,6ª2,6ª3,8,8,8
7700000000007870001
45268569000
10ª1,10ª2,10ª3áâà1,10ª3áâà3,10ª3áâà4
7700000000007870002
10ª3áâà5,10ª3áâà6,12,45,45áâà2
7700000000007870003
16ª1,16ª2,16ª2áâà3,22,24áâà3,24ª1,24ª2
7700000000007870004
121471
24,26,28,30,32,51,51ª2,53,55,55áâà2,61
7700000000007870005
áâà5,4,11,11áâà1,11,11
7700000000007880001
13,13,94áâà2
7700000000007880002
1,2,2ª1,3,4,4áâà2,5,6,7,8,8áâà1,8áâà2
7700000000007890001
129128
45280577000
8áâà3,9,9áâà1,11ª1,11ª2,11ª3,11ª4,13
7700000000007890002
13ª1,13ª2,13ª2áâà1,13ª2áâà2,15ª1
7700000000007890003
15ª1áâà2,15ª2,15ª2áâà2,16,17áâà1
7700000000007890004
17áâà2,17áâà4,17áâà5,17áâà6,17áâà9
7700000000007890005
17áâà10,17áâà14,17,18,18áâà2,20,22,24
7700000000007890006
24áâà1,24ª2,24ª2áâà2,26,28áâà1,28áâà2
7700000000007890007
1/25áâà1,2,2ª1,2ª2,3áâà1,4,5áâà1,9,11
7700000000007900001
12/2,15,17,18,19,20áâà1,21áâà1,23,25
7700000000007900002
1,1,1áâà2,3áâà1,3áâà2,5_7,5_7áâà2
7700000000007910001
6áâà3,6áâà5,8áâà1,8áâà5,9,9áâà1,10áâà1
7700000000007910002
10áâà2,11,11áâà1,11áâà4,11áâà5
7700000000007910003
14_16áâà1,16áâà2,16áâà5,19,21,24,26
7700000000007910004
26áâà1,26áâà2,33áâà1,33áâà2
7700000000007910005
23,25ª1,25ª1áâà1,25ª2,25ª3,25ª3áâà1
7700000000007920001
25ª3áâà2,25ª4,26/10,27,28,28áâà1,28ª3
7700000000007920002
28,29,30áâà3,30ª1,30ª1áâà1,30ª2,30ª3
7700000000007920003
30ª4,31,32,32áâà1,33ª1,33ª2,33ª3,33ª4
7700000000007920004
34,35,35áâà2,35áâà4,35áâà5,35ª3,35ª4
7700000000007920005
35ª4áâà1,35ª4áâà2,35,36,37,37,37ª1
7700000000007920006
38ª1,38ª2,38ª3,38ª4,39,40/17,40/17áâà1
7700000000007920007
1áâà8,1/3áâà1,1/3áâà2,1/3áâà3,1/3áâà4
7700000000007920008
1/3áâà5,1/3áâà6,1/3áâà7,1/3áâà12
7700000000007920009
1/3áâà13,1/3áâà14,2,2áâà1,5áâà1,5áâà2
7700000000007920010
7700000000007920011
5áâà9,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000007920012
7700000000007920013
9áâà8,9áâà9,9áâà1,9áâà2,9áâà3,9,11
7700000000007920014
11áâà2,11áâà4,11áâà5,12,12ª1,12ª2
7700000000007920015
12ª2áâà2,12ª2áâà4,12,12áâà1,13
7700000000007920016
13áâà1,14áâà3,14ª1,14ª2,15,16ª1,16ª2
7700000000007920017
16ª2áâà1,16ª3,16ª4,17ª1,17ª2,17ª3,17ª4
7700000000007920018
17ª4áâà1,18áâà1,18áâà2,18áâà3,18ª1
7700000000007920019
18ª2,18ª3,18ª4,18,22áâà1
7700000000007920020
4,4áâà1,42ª2,42/14ª1,44,44áâà5,44ª1
7700000000007920021
7áâà6,7áâà7,7áâà9,7áâà11,7áâà12,7áâà13
7700000000007920022
7áâà14,7áâà15,7áâà16,7áâà17,7áâà18
7700000000007920023
41ª1,41ª2,41ª3,41ª3áâà1,41ª4,43,43áâà1
7700000000007920024
45,47,47áâà1,49,49áâà1,49,51áâà8
7700000000007920025
51áâà9,51áâà10,51ª1,51ª1áâà1,51ª1áâà3
7700000000007920026
51ª2,51ª3,51ª4,51áâà1
7700000000007920027
2,2áâà2,2áâà3,3,3áâà1,3áâà2,3áâà3,4,4
7700000000007930001
117513
45293586000
5,6,6áâà1,6áâà2,8,8ª1,10,10áâà1,10áâà3
7700000000007930002
12,14,16,18,18áâà1,18áâà2,20
7700000000007930003
1áâà1,1_3,2_4,4áâà3,4_6áâà1,4_6áâà2
7700000000007940001
4_6áâà3,4_6áâà4,4_6áâà5,4_6áâà6,5
7700000000007940002
5áâà3,6,7áâà1,7áâà2,7áâà3,7áâà5,7áâà7
7700000000007940003
7ª1,8,9_11áâà4,9_11áâà5,10_12áâà1
7700000000007940004
10_12áâà2,10_12áâà3,10_12áâà4
7700000000007940005
10_12áâà5,11áâà1,11áâà3,13,13áâà5
7700000000007940006
14áâà1,14áâà3,14áâà4,14áâà5,14áâà6
7700000000007940007
14áâà8,14áâà9,14áâà10,14áâà11,14áâà12
7700000000007940008
14áâà13,14áâà16,14áâà21,14áâà22,15
7700000000007940009
17/28,18áâà5,24,24ª5
7700000000007940010
23_41,23_41áâà2,23_41áâà3,26áâà1
7700000000007940011
105082
26_30áâà1,32_36ª1,38áâà3,38_42áâà1
7700000000007940012
38_42áâà2,38_42áâà4,41áâà1,43_55
7700000000007940013
44_48áâà1,44_48áâà2,45,49áâà4,49áâà5
7700000000007940014
49áâà6,50áâà1,50áâà3,52áâà1,54áâà1
7700000000007940015
55áâà3,55áâà4,57/25,58áâà1,60áâà4
7700000000007940016
62_68áâà1,62_68áâà2,69áâà1,70áâà1,71
7700000000007940017
71áâà10,72áâà1,72áâà2,73áâà1,73áâà2
7700000000007940018
73áâà3,74_76ª1,74_76ª2,74_76ª4,74_76ª5
7700000000007940019
74_76ª7,74_76ª8,74_76ª9,74_76ª10
7700000000007940020
74_76ª11,74_76ª12,74_76ª13,74_76ª14
7700000000007940021
77áâà3,78áâà1,80áâà1,81,81áâà2,81áâà3
7700000000007940022
81áâà4,81áâà5,81áâà6,81áâà8,81áâà9
7700000000007940023
81áâà10,81/55áâà11,81/55áâà12
7700000000007940024
81/55áâà14,81/55áâà15,81/55áâà16
7700000000007940025
81/55áâà17,82áâà1,83áâà3,84áâà1
7700000000007940026
92áâà1,92áâà2,92áâà3,92áâà5,92áâà6
7700000000007940027
92áâà8,92áâà9,94áâà1,94áâà2,96_98áâà1
7700000000007940028
96_98áâà6,96_98áâà14,98ª6,98áâà11
7700000000007940029
98áâà12,98ª13,100áâà5,100áâà6
7700000000007940030
1áâà3,1áâà4,1áâà5,1áâà6,1áâà7,1áâà10
7700000000007950001
1áâà16,1áâà17,1/28áâà1,1/28áâà2
7700000000007950002
1/28áâà9,1/28áâà12,1/28áâà13,1/28áâà14
7700000000007950003
2/26,19,21,23
7700000000007950004
1/28áâà11
7700000000007950005
19,19áâà2,33,33áâà2,33áâà3,33áâà4
7700000000007960001
33áâà5,33áâà6,33áâà8,33áâà9,33áâà10
7700000000007960002
33áâà12,33áâà14,33áâà20,33áâà21
7700000000007960003
33áâà32,33áâà33
7700000000007960004
30áâà,30áâà,30áâà,30áâà1,30áâà2
7700000000007960005
30ª2,30,32ª1,32ª2,32ª4,32,34áâà1
7700000000007960006
34ª1,34ª2,34ª3,34ª4,34ª5,34ª6,34ª7
7700000000007960008
34ª8,34ª8áâà1,34,36áâà1,36ª1,36ª2
7700000000007960009
36ª3,36ª4
7700000000007960010
16ª1,16ª2,16ª2áâà1,18,18áâà1,18ª1,18ª2
7700000000007960011
18ª2áâà1,18ª2áâà2,18,20ª1,20ª2,20ª3
7700000000007960012
20ª4,22,24áâà2,24ª1,24ª1áâà1,24ª2,24ª3
7700000000007960013
26,26ª1,26ª2,28áâà1,28,28áâà1
7700000000007960014
28áâà2,28áâà3,28áâà4,28áâà5
7700000000007960015
28áâà1,28áâà2,28áâà3,28áâà4
7700000000007960016
28áâà5,28áâà,28áâà,28áâà
7700000000007960017
28áâà2,28
7700000000007960018
11,11
7700000000007960019
117461
38,40,42,44,46ª1,46ª2,46ª2áâà1,46
7700000000007960020
46áâà2,46áâà3,48ª1,50,50áâà1,52ª1
7700000000007960021
52ª1áâà1,52ª2,54,54áâà1,56ª1,56ª1áâà1
7700000000007960022
56ª1áâà2
7700000000007960023
53áâà1,53áâà3,53áâà4,53áâà5,53áâà7
7700000000007960024
2ª2,2ª3,2ª3áâà2,2ª4,2ª5,2ª5áâà2,2ª6
7700000000007960025
2ª7,4ª1,4ª2,4ª3,4ª4,4ª5,4ª5áâà2,4ª6
7700000000007960026
4ª7,4ª8,4ª8áâà2,4ª8áâà3,6,6,6,8,8
7700000000007960027
8áâà2,10ª1,10ª2,10ª3,10ª3áâà5,12ª1
7700000000007960028
12ª2,12ª2áâà2,12ª2áâà3,12ª3,12ª3áâà1,14
7700000000007960029
1,1áâà2,1áâà3,3,3,3,5,5áâà2,5áâà3
7700000000007960030
5áâà4,5,5áâà7,5áâà10,5áâà11
7700000000007960031
5áâà12,7,7áâà2,7,15áâà2
7700000000007960032
7700000000007960007
117648
4,4áâà2,6ª1,6ª2,6ª3,8,8áâà2,8áâà3
7700000000007970001
8áâà4,8áâà5,8áâà6,8áâà7,8áâà8,8áâà12
7700000000007970002
7700000000007970003
8áâà18,8áâà19,8áâà22,8áâà23,10ª1,10ª2
7700000000007970004
10ª3,14,14áâà3,14áâà5,14áâà7,14áâà10
7700000000007970005
3/25,4,6/21áâà10,6/21áâà11,6/21áâà12
7700000000007980001
6/21ª1,6/21ª2,6/21ª3,6/21ª4,6/21ª7áâà2
7700000000007980002
2,4,4,6
7700000000007990001
1/18ª,1/18ª,3,3,3áâà2,3áâà3,5
7700000000007990002
3,3áâà2,3áâà5,4ª1,4ª2,4ª3,4ª4,4ª5
7700000000008000001
4ª5áâà2,5,6áâà2,6ª1,6ª2,6ª3
7700000000008000002
1,3/2,5,7
7700000000008010001
115035
7700000000008010002
2áâà1,2áâà2,2áâà4,3,4áâà1,4áâà2,6,7ª1
7700000000008030001
7ª2,8,9
7700000000008030002
3áâà1,3áâà2,3áâà3,3áâà4,3áâà10
7700000000008040001
3,4,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000008050001
107023
4áâà6,8,11,11áâà1
7700000000008050002
4,8/2áâà1,8/2áâà4,12
7700000000008060001
105062
1,1ª1,1áâà1,3áâà6,3áâà20,3áâà43
7700000000008070001
3áâà45,3áâà46,3áâà54,3ª2,3ª3,3ª4,3ª5
7700000000008070002
3ª6,3ª7,3ª8,3ª9,3ª10,3ª11,3ª12,3ª13
7700000000008070003
3ª14,3ª15,3ª16,3ª17,3ª18,3ª19,3ª20
7700000000008070004
3ª21,3ª22,3ª23,3ª24,3ª27,3ª28,3ª29
7700000000008070005
3ª30,3ª32,4,6,8,8áâà2,8áâà3
7700000000008070006
4ª1,4ª1áâà4,4ª2,4,6,8,8ª2,8ª2áâà3,8
7700000000008080001
121596
10,10áâà3,10,12,14,16ª1,16ª2,16ª3,18
7700000000008080002
20,22,24,24
7700000000008080003
7700000000008090001
119334
7736
45293558000
4áâà21,4áâà22,4ª3,6áâà1,6áâà2,6áâà3
7700000000008090002
6,6áâà2,6áâà3,6áâà5,6áâà7,6áâà8,6áâà9
7700000000008100001
6áâà12,6áâà22,6áâà25,6áâà26,6áâà32
7700000000008100002
6áâà37,6áâà39,6áâà40,6áâà41,8
7700000000008100003
1,1,1,1,1
7700000000008100004
121096
3,5áâà6,5áâà7,5ª1,5ª2,5ª3,5ª4,5ª5,5
7700000000008100005
5áâà2,5áâà3,7ª1,7/1áâà3,7/1ª2,9
7700000000008100006
9/2áâà2,9/2áâà3,9
7700000000008100007
10,10_,10,10,11,12,12áâà2,12áâà3
7700000000008100008
13áâà1,13áâà2,13áâà3,13ª1,13ª2,14,15ª1
7700000000008100009
15ª2,15ª3,15ª3áâà2,16ª1,16ª2,16ª3,16ª4
7700000000008100010
17,18/19,18/19áâà2,18/19áâà3,20,22
7700000000008100011
22áâà1,22áâà2,22áâà3,26
7700000000008100012
2áâà16,2/1áâà1,2/1áâà2,2/1áâà3,2/1áâà4
7700000000008110001
123242
2/1áâà5,2/1áâà6,2/1áâà7,2/1áâà18,4áâà2
7700000000008110002
4áâà3,8áâà4,8áâà5,8áâà6,8áâà8,8áâà9
7700000000008110003
8,8áâà7,12/2áâà3,19áâà1,19áâà3
7700000000008110004
21/34áâà3
7700000000008110005
2,3,4áâà2,4áâà3,5,6,7,9áâà2,10
7700000000008120001
119034
10áâà2,10/12
7700000000008140001
105064
6áâà3,6áâà1,6áâà2,6áâà3,6áâà4,6áâà6
7700000000008140002
1ª1,1ª2,1ª3,3,3áâà2,3áâà3,5áâà1,5áâà1
7700000000008160001
5áâà2,5áâà3,5áâà4,5áâà5,5áâà6,5áâà7
7700000000008160002
5áâà8,5áâà9,5áâà10,5áâà11,5áâà12
7700000000008160003
5áâà13,5áâà13,5áâà14,5áâà16,5áâà19
7700000000008160004
5áâà20,5áâà21,5áâà22,5áâà24,5áâà25
7700000000008160005
5áâà33,5áâà48,5áâà49,5áâà51,5áâà52
7700000000008160006
5áâà56,5áâà57,7áâà1,7áâà1,7áâà2,7áâà3
7700000000008160007
7áâà5,9/23áâà3,9/23áâà4,9/23ª11áâà1
7700000000008160008
5áâà1,6áâà2,7áâà1,7áâà2,7áâà3,7áâà4
7700000000008170001
7áâà5,7áâà6,9,11áâà1,11áâà2,11áâà3
7700000000008170002
11áâà4,11áâà5,11áâà6,11áâà6,11áâà7
7700000000008170003
11áâà8,11áâà10,11áâà10,13áâà1,13áâà2
7700000000008170004
7700000000008170005
7700000000008170006
17/1ª1,17/1ª2,17/1ª3,19,20áâà2,20áâà3
7700000000008170007
20áâà7,20áâà9,21,22,23,23áâà2,23áâà3
7700000000008170008
23áâà4,24,26,27,28áâà2,32áâà1,32áâà2
7700000000008170009
33/2áâà1,33/2áâà3,33/2áâà8,33,33áâà1
7700000000008170010
33áâà2,33áâà3,34/20,35áâà5,35/1
7700000000008170011
35/1áâà6,35/1áâà8,36,36áâà2,36áâà3
7700000000008170012
38áâà1,38áâà2,39,40,42,43áâà2,43/1áâà1
7700000000008170013
43/1áâà2,43/1áâà3,44áâà1,44áâà2,46
7700000000008170014
48/13,50/12áâà1,50/12áâà2,53,53áâà1
7700000000008170015
53áâà2,53áâà3,53áâà4,53áâà5,53áâà6
7700000000008170016
53áâà7,53áâà8,53áâà9,53áâà10,53áâà11
7700000000008170017
53áâà12,53áâà13,53áâà14,53áâà15
7700000000008170018
53áâà16,53áâà17,53áâà18,53áâà19
7700000000008170019
53áâà20,54áâà3,56/17áâà1,56/17áâà2
7700000000008170020
57áâà2,57áâà1,58áâà4,58/25,58/25áâà1
7700000000008170021
58/25áâà4,58/25áâà5,58/25áâà6
7700000000008170022
58/25áâà7,58/25áâà9,58/25áâà10
7700000000008170023
58/25áâà11,58/25áâà14,58/25áâà16
7700000000008170024
58/25áâà18,58/25áâà19,58/25ª2áâà1
7700000000008170025
58/25ª8,58/25ª12áâà2,58/3áâà2,58/3áâà5
7700000000008170026
58,60/5,62_66,66/11,68/8áâà1,70áâà1
7700000000008170027
70áâà2,70áâà3,70áâà4,70áâà5
7700000000008170028
13,15áâà1,15áâà2,16áâà1,16áâà2,17áâà1
7700000000008180001
115054
17áâà2,17áâà5,17áâà6,17áâà7,17áâà10
7700000000008180002
18áâà1,18áâà2,18áâà3,18áâà4,19áâà1
7700000000008180003
19áâà2,20,21áâà3,21áâà4,21_23áâà5
7700000000008180004
23áâà1,23áâà2,23áâà6,24áâà1,25,27,28
7700000000008180005
29,29áâà6,29áâà7,29áâà9,29áâà10
7700000000008180006
29áâà11,29áâà12,30,31/12áâà1
7700000000008180007
31/12áâà2,31/12áâà3,32áâà1,32áâà2
7700000000008180008
36/14áâà3
7700000000008180009
1áâà1,1áâà5,2áâà1,2/5áâà2,4áâà1,8áâà8
7700000000008180010
115184
8áâà9,8áâà10,8áâà12,8áâà14,9áâà1,9áâà2
7700000000008180011
10áâà1,10áâà2,10áâà3,10áâà4,11áâà1
7700000000008180012
11áâà2,11/48áâà1,11/48áâà2,11/48áâà4
7700000000008180013
12áâà1,12áâà2,14áâà1
7700000000008180014
7700000000008190001
125040
4,4áâà1,4áâà2,6,8,10,10áâà1,10áâà2,12
7700000000008190002
45277556000
14,14áâà2,16,16áâà1
7700000000008190004
7700000000008190003
1ª1,1ª2,2áâà3,3ª1,3ª1áâà2,3ª2,6,7,8,9
7700000000008200001
127220
10,10áâà2,10áâà3,11,11áâà3,12,12áâà3
7700000000008200002
13,14ª1,14ª2
7700000000008200003
15,17,17áâà1,17áâà10,19,19áâà2,19áâà3
7700000000008200004
21,21áâà2,23áâà6,23ª1,23ª2,23ª3,23ª4
7700000000008200005
23áâà1,24,24áâà1,24áâà2,24áâà3,24áâà4
7700000000008200006
24áâà5,24áâà9,24áâà17,24áâà18,24áâà19
7700000000008200007
24áâà20,24áâà21,24áâà22,24áâà31,25
7700000000008200008
25áâà4,26,27,27ª2,28,28áâà1,28áâà9,29
7700000000008200009
7700000000008200010
2áâà1,3,3áâà1,3,7,7
7700000000008210001
26,26áâà5,38áâà1,38ª1,38ª2,38ª3
7700000000008220001
27áâà1,27áâà2,34
7700000000008230001
7700000000008240001
3,3áâà2,3,3áâà2,5ª1,5ª2,5ª3,7ª2,7
7700000000008250001
125284
7,9,9,9áâà5,11
7700000000008250002
2,2áâà2,2áâà1,2,2áâà1,4,4áâà1,4áâà2
7700000000008260001
4áâà3,5,6,6ª1,6ª2,6ª3,6ª3áâà3,6ª4,6,7
7700000000008260002
7áâà2,7áâà3,7áâà4,7áâà8,10,11,11áâà2
7700000000008260003
11áâà4,12,13,13áâà8,14,15,16,17ª1,17ª2
7700000000008260004
18ª1,18ª2,18ª2áâà1,19,19áâà2,20ª1,20ª2
7700000000008260005
20ª2áâà2,22,22áâà1,22áâà2,22áâà3
7700000000008260006
7700000000008260007
22áâà9,22áâà10,22áâà11,22áâà12,22áâà13
7700000000008260008
22áâà14,22áâà15,22áâà16,22áâà17
7700000000008260009
22áâà17,22áâà18,22áâà19,22áâà20
7700000000008260010
22áâà21,22áâà22,22áâà23,22áâà24
7700000000008260011
22áâà25,22áâà26,22áâà27,22áâà28
7700000000008260012
22áâà29,22áâà30,22áâà31,22áâà32
7700000000008260013
22áâà33,22áâà34,22áâà36,22áâà39
7700000000008260014
22áâà40,22áâà41,22ª2,24,24áâà3,26
7700000000008260015
26áâà2,28,28áâà1,28áâà2,32,32áâà2,34
7700000000008260016
36áâà1
7700000000008260017
1,1áâà2,1áâà31,3áâà1
7700000000008260018
45277598000
5,5áâà1,5áâà2,7,8,9,9áâà2,11
7700000000008270001
7700000000008280001
1,1ª2,3,3,4,5,7,10,15,15ª2,15ª3,15
7700000000008300001
121353
17,17áâà2,17ª2,17ª2áâà1,19,21,21áâà8
7700000000008300002
21áâà9,23,25,27,33,37,37ª1,37ª1áâà1
7700000000008300003
37ª1áâà2,39ª1,39ª1áâà6,39ª1,39ª2,39ª3
7700000000008300004
39ª3áâà7,39ª4,39ª4,39ª5,39ª6,39ª7,41
7700000000008300005
43,43áâà2,45,47,49,51,53ª2,53ª2áâà2
7700000000008300006
53ª2áâà3,53ª2,55,57,57áâà1,57áâà2,61
7700000000008300007
63,67,67áâà2,69,71,71áâà1,71áâà2,73
7700000000008300008
73áâà2,75,75áâà1,77,79,81,83,85,85áâà1
7700000000008300009
2/1,6,8,10,13,13áâà2
7700000000008310001
1,2/7,3,5áâà1,6,7,9
7700000000008320001
1,1áâà2,3,3áâà1,3,3áâà1,3áâà2,3
7700000000008330001
127543
5,7,8,9,9,9áâà1,9áâà2,9,11,11
7700000000008330002
11áâà1,11áâà2,11,11,12,12áâà1,13
7700000000008330003
14,14áâà1,15,17,17,17áâà1,17áâà2
7700000000008330004
17,17,17áâà1,19,21,21áâà2,23,23áâà1
7700000000008330005
23,23,23
7700000000008330006
1áâà1,1áâà3,1áâà4,1áâà5
7700000000008340001
9áâà1,9áâà2
7700000000008340002
45263581000
2áâà1,2áâà2,2áâà3,2áâà6,2,2áâà4,2ª2
7700000000008350001
2,2áâà1,2áâà2,8áâà1,8áâà2
7700000000008350003
2áâà1
7700000000008350002
2,2áâà1,2áâà2,4,6,8,8áâà2,10áâà3
7700000000008360001
10ª2,10ª2áâà2,10ª3,10ª4,10,10áâà3,12
7700000000008360002
12ª1,12ª1áâà1,14áâà2,14ª1,14ª2,16
7700000000008360003
16áâà2,16,16áâà2,18ª1,18ª2,18ª3,18ª4
7700000000008360004
18,18áâà1,20,20ª1,20ª1áâà1,20ª2
7700000000008360005
20ª2áâà1,20ª3,20ª3áâà1,22ª1áâà2
7700000000008360006
22ª2áâà2,24,26,26áâà2,26áâà1,26áâà2
7700000000008360007
32,32áâà2,34/51áâà2
7700000000008360008
1,1áâà1,1áâà1,1áâà1,3ª1,5ª1,5ª2,5ª3
7700000000008360009
125445
11ª2áâà2,13áâà1,13ª1,13ª2,15áâà3,19/38
7700000000008360010
21,36,36áâà1,36áâà2,36áâà1,36áâà2
7700000000008360011
36áâà4,36áâà1,36,38,38áâà1,38
7700000000008360012
5áâà1,7ª1,7ª2,7ª3,9,11,11ª2,11ª2áâà1
7700000000008360013
38áâà5,38áâà6,38áâà11,38áâà12
7700000000008360014
38áâà13,38áâà14,38áâà15,38áâà16
7700000000008360015
1,1áâà1,1áâà1,2áâà1,3áâà1,3áâà2
7700000000008400001
3/18áâà1,3/18áâà2,4,4áâà6,6,7,7áâà1,9
7700000000008400002
13,14,14áâà1,19_21áâà1,19_21áâà2,20,22
7700000000008400003
27_29áâà3,27_29áâà4
7700000000008400004
1,1áâà1,2áâà1,2áâà2,3,3áâà1,3áâà2
7700000000008410001
125367
45283569000
3áâà3,3áâà4,3ª1,3ª4,3ª5,3ª6,3ª7,3ª8
7700000000008410002
3ª9,3ª10,3ª11,3ª12,3ª13,3ª14,3ª15,3ª16
7700000000008410003
3ª17,3ª20,3ª21,3ª22,3ª23,3ª24,3ª25
7700000000008410004
3ª26,3ª27,3ª28,3ª29,3ª30,3ª31,3ª32
7700000000008410005
3ª33,3ª34,3ª35,3ª36,3ª37,3ª38,3ª39
7700000000008410006
3ª40,3ª41,3ª42,3ª43,3ª44,3ª45,4,4áâà1
7700000000008410007
4áâà2,4áâà3,4áâà4,4áâà5,4áâà6,4ª1,4ª2
7700000000008410008
4ª3,4ª4,4ª5,4ª6,4ª7,4ª8,4ª9,4ª10,6
7700000000008410009
6áâà2,8,8ª1,8ª2,8ª2áâà2,8ª3,8ª4
7700000000008410010
áâà2,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000008420001
7700000000008420002
2áâà12,2áâà13,2áâà14,2áâà14,2áâà15
7700000000008420003
2áâà16,2áâà17,2áâà17,2áâà18,2áâà19
7700000000008420004
2áâà20,2áâà21,3,3áâà1,3áâà2,3áâà3
7700000000008420005
3áâà5,3áâà6,3áâà7,3áâà8,3áâà10,3áâà16
7700000000008420006
4ª3,4ª3áâà2,4ª3áâà5,4ª3áâà8,4/6áâà1
7700000000008420007
4/6áâà2,4/6áâà3,4/6áâà4,4/6áâà10,5áâà1
7700000000008420008
5áâà2,5áâà8,5áâà13,5áâà16,5áâà18
7700000000008420009
5áâà24,5áâà25,5áâà26,5áâà28,7,7áâà1
7700000000008420010
7áâà2,7ª1,8,8áâà2,9ª1,9ª2,9ª5,9ª5áâà3
7700000000008420011
áâà30,2,2,4,4áâà2,4,6,6áâà2,8,10
7700000000008430001
121059
10áâà2,10áâà4,12,12áâà1,12áâà2
7700000000008430002
12áâà5,12áâà7,12,12,12áâà3,14
7700000000008430003
14áâà2,14,16,16áâà1,16áâà2,16áâà4
7700000000008430004
16áâà8,16áâà9,16áâà11,16áâà13,16áâà14
7700000000008430005
16áâà23,16áâà24,16áâà25,16áâà26
7700000000008430006
16áâà27,16áâà28,16áâà31,16áâà34
7700000000008430007
16áâà53,16áâà78,16ª2,16,16áâà2
7700000000008430008
16áâà7,16,18,18áâà3,18,20,20áâà1
7700000000008430009
7700000000008430010
20áâà7,20áâà8,20áâà9,20áâà10,20áâà11
7700000000008430011
20áâà12,20áâà13,20áâà14,20áâà18
7700000000008430012
20áâà19,20áâà20,20áâà21,20áâà22
7700000000008430013
20áâà23,20áâà24,20áâà26,20áâà28
7700000000008430014
20áâà30,20áâà32,20áâà33,20áâà34
7700000000008430015
20áâà35,20áâà38,20áâà39,20áâà40
7700000000008430016
20áâà41,20áâà42,20áâà43,20áâà44
7700000000008430017
20áâà45,20áâà46,20áâà47,20áâà48
7700000000008430018
20áâà50,20áâà52,20áâà53,20áâà54
7700000000008430019
20áâà55,20áâà56,20áâà57,20áâà59
7700000000008430020
20áâà60,20áâà61,20áâà62,20áâà63
7700000000008430021
20áâà64,20áâà65,20áâà66,20áâà67
7700000000008430022
20áâà68,20áâà69,20áâà70,20áâà71
7700000000008430023
20áâà72,20áâà73,20áâà74,20áâà75
7700000000008430024
20áâà76,20áâà77,20áâà78,20áâà79
7700000000008430025
20áâà80,20áâà81,20áâà82,20áâà83
7700000000008430026
20áâà87,20áâà88,20áâà89,20áâà90
7700000000008430027
20áâà91,20áâà92,20áâà93,20áâà94
7700000000008430028
20áâà95,20áâà96,20,20,20,20,20
7700000000008430029
20,22,22áâà2,22áâà3,22áâà4,22áâà5
7700000000008430030
22áâà6,24,24áâà1,24áâà2,24áâà3,24áâà4
7700000000008430031
24áâà8,24áâà9,24áâà11,24áâà12,24
7700000000008430032
24áâà1,26,28,30áâà1,30áâà2,30áâà3
7700000000008430033
30áâà4,30áâà5,30ª1,30,30,32,34,34
7700000000008430035
36,36,38,38áâà2,38áâà1
7700000000008430036
5áâà6,6áâà1,6áâà2,6áâà3,6áâà4
7700000000008440001
12ª2,12ª3,12ª4,12ª6,12ª7,12,14áâà1
7700000000008440002
14áâà2,14áâà3,14áâà4,14áâà6,16
7700000000008440003
17áâà1,17áâà2,17áâà3,17áâà4
7700000000008440004
17áâà5,17áâà6,17áâà7,17áâà8
7700000000008440005
17áâà9,17áâà10,17áâà11,17áâà12
7700000000008440006
17áâà13,17áâà14,17áâà15,17áâà16
7700000000008440007
17áâà17,17áâà18,17áâà19,17áâà20
7700000000008440008
17áâà21,17áâà22,17áâà23,17áâà24
7700000000008440009
17áâà25,17áâà26,17áâà27,17áâà28
7700000000008440010
17áâà29,17áâà30,17áâà31,17áâà32
7700000000008440011
17áâà33,17áâà34,17áâà35,17áâà36
7700000000008440012
17áâà37,17áâà38,17áâà39,17áâà40
7700000000008440013
19áâà1
7700000000008440014
2áâà1,2áâà2,4,5,5,7,7áâà1,7,7,7
7700000000008440015
7áâà1,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5
7700000000008440016
7700000000008440017
8áâà12,8áâà13,8áâà14,8áâà15,8áâà16
7700000000008440018
8áâà17,8áâà18,8áâà19,8áâà20,8áâà21
7700000000008440019
8áâà22,8áâà32,9,9áâà1,9áâà2,9,10áâà2
7700000000008440020
10áâà17,10ª1,10ª2,10ª3,10ª4,10ª4,10ª5
7700000000008440021
10ª6,10ª8,10ª9,10ª13,10ª14,10ª16,10ª17
7700000000008440022
10ª18,10ª19,10ª19áâà1,10ª20,10ª22
7700000000008440023
10ª23,10ª24,10ª25,10ª26,10ª27,10ª28
7700000000008440024
10ª28áâà1,10ª29,10ª29áâà1,10ª31,10ª32
7700000000008440025
10ª33,10ª33,10ª34,10ª35,10ª36,10ª37
7700000000008440026
10ª38,10ª39,10ª40,10ª41,10ª42,10ª43
7700000000008440027
10ª44,10ª44,10ª49,10ª55,10ª63,10ª64
7700000000008440028
34áâà18,34áâà19,34áâà28,34áâà30,39áâà1
7700000000008470001
123060
45283582000
39áâà2,39áâà3,39áâà4
7700000000008470002
22,24,26,26ª1,26ª2,28,28áâà1,28áâà2
7700000000008470003
28áâà3,28áâà4,28áâà5,28áâà6,28áâà7
7700000000008470004
28áâà8,28áâà9,28áâà10,28áâà12,28áâà13
7700000000008470005
28áâà14,28áâà19,28áâà20,28áâà25
7700000000008470006
28áâà31,30,30áâà2,30áâà3,30áâà4,30áâà5
7700000000008470007
30áâà6,30áâà7,30áâà9,30áâà10,30áâà11
7700000000008470008
30áâà12,30áâà13,30áâà14,32,32áâà2
7700000000008470009
7700000000008470010
7700000000008470011
32áâà13,32áâà14,32áâà16,32áâà17
7700000000008470012
32áâà18,32áâà19,32áâà20,32áâà21,34
7700000000008470013
34áâà1,34áâà2,34áâà3,34áâà4,34áâà6
7700000000008470014
34áâà7,34áâà8,34áâà9,34áâà10,34áâà11
7700000000008470015
34áâà12,34áâà13,34áâà14,34áâà16
7700000000008470016
34áâà26,34áâà33,34áâà34,36áâà1,36áâà2
7700000000008470017
36áâà3,36áâà4,36áâà5,36áâà6,36áâà9
7700000000008470018
36áâà10,36áâà11,36áâà19,36áâà20,36áâà22
7700000000008470019
15,15áâà1,17áâà1,17áâà2,17áâà3,17áâà4
7700000000008470021
123154
7700000000008470022
17áâà12,17áâà13,17áâà14,17áâà15
7700000000008470023
17áâà16,17áâà17,17áâà18,17áâà19
7700000000008470024
17áâà20,17áâà21,17áâà22,17áâà28,17ª1
7700000000008470025
17ª2,19ª1,19ª1áâà1,19ª2,21,21ª1
7700000000008470026
21ª1áâà1,21,23,23ª2,23ª2áâà1
7700000000008470027
1,1áâà1,1áâà3,3ª1,3ª1áâà1,3ª2,3ª2áâà1
7700000000008470028
123298
5,5áâà1,7ª1,7ª2,7ª2áâà4,7ª2áâà8,9,11
7700000000008470029
1ª2áâà1,1ª2áâà2,1ª2áâà3,1ª2áâà4
7700000000008470030
1ª2áâà5,1ª2áâà6,1ª2áâà7,1ª2áâà8
7700000000008470031
1ª2áâà9,1ª2áâà10,1ª2áâà11,4,6ª1,6ª2,8
7700000000008470032
10,10ª2,10ª2áâà2,12,14,16
7700000000008470033
1,3,3áâà2,3áâà3,3áâà4,3áâà5,3áâà6,4
7700000000008480001
4áâà1,4áâà2,5,5,6ª1,6ª2
7700000000008480002
7700000000008490001
109240
12áâà1
7700000000008500001
2áâà1,4áâà3,6áâà1,6áâà2,6áâà3,6áâà4
7700000000008510001
119072
6áâà5,8áâà1,12áâà1,14áâà5,14áâà5
7700000000008510002
14áâà8,14_14áâà5,16áâà4,16áâà5,16áâà9
7700000000008510003
20/2,22áâà1
7700000000008510004
31,33,33áâà1,35,35áâà1,36,36áâà3,36ª1
7700000000008520001
36ª2,36ª2áâà1,36ª3,36ª4,36ª4áâà1,37
7700000000008520002
38ª1,39,40ª1,40ª2,40ª2áâà1,40ª2áâà3
7700000000008520003
40ª3,44,46ª1,46ª2,46ª3,48ª1,48ª3,48ª4
7700000000008520004
48ª4áâà2,48ª5,48ª6,48ª7,48,50,50,50
7700000000008520005
52,52áâà2,52,54,56áâà2,56ª1,58áâà2
7700000000008520006
58ª1,58ª2,58ª3,58ª5áâà1
7700000000008520007
2ª1,2ª2,2ª3,2ª3áâà1,2,3ª1,4,4áâà2,5ª1
7700000000008520008
5ª1áâà2,6ª2,6ª2áâà1,6ª3,6ª4,7ª1,7ª2
7700000000008520009
7ª3,8ª3áâà1,8ª3áâà2,9,9,10ª1,10ª2
7700000000008520010
10ª3,10ª4,10ª5,10áâà1,11ª1,11ª2,11ª3
7700000000008520011
11ª3áâà1,12,12áâà4,12,13/10,15áâà1
7700000000008520012
15ª1,15ª1áâà2,15,16ª1,16ª2,16ª3,16ª4
7700000000008520013
16,17áâà1,20ª1,20ª2,20ª3,20ª4,20ª5
7700000000008520014
20,21ª3áâà1,21,22,22áâà1,22áâà2
7700000000008520015
22áâà4,23,23ª1,23ª1áâà1,24,24ª1
7700000000008520016
24ª1áâà1,25ª1,25ª1áâà1,25ª1áâà2,25ª3
7700000000008520017
27ª1,27ª2,27ª3,28ª1,28ª2,28ª3,28ª4
7700000000008520018
28ª5,28ª5áâà1,28ª5áâà2,29,29ª1,30ª2
7700000000008520019
30ª2áâà2,30ª2áâà3,30ª3,30ª3áâà2,30ª4
7700000000008520020
30ª4áâà2,32ª1,32ª2,32ª3,32ª4,32ª5
7700000000008520021
32ª5áâà2,32ª6,32ª6áâà1,32ª6áâà2,32
7700000000008520022
34ª1áâà1,34ª1áâà3
7700000000008520023
6ª3áâà1,6ª3áâà2,8ª1,8ª2,8ª2áâà1,8ª3,8ª4
7700000000008520024
45,47,49,51,51áâà1,53,53,55ª1,55ª2
7700000000008520025
55ª3,55ª3áâà1,57ª1,57ª2,57ª3,59áâà1
7700000000008520026
59áâà2,59áâà3,59,59áâà1,59áâà2
7700000000008520027
59áâà2,59áâà3,59áâà4,59áâà5
7700000000008520028
59áâà6,59áâà7,59áâà8,59áâà9
7700000000008520029
59áâà11,59áâà13,59áâà14,59áâà20
7700000000008520030
59áâà21,59áâà22,59áâà23,59áâà24
7700000000008520031
59áâà25,59ª4
7700000000008520032
3ª1,3ª2,3ª3,4,5,5áâà2,6,8
7700000000008530001
1,1,1áâà1,1áâà2,1,2,2,3,3áâà2,3
7700000000008540001
3,3áâà1,3áâà2,4,4áâà1,4,4áâà1,5,6
7700000000008540002
6,7,7áâà1,7ª1,7,7,7áâà1,7,7
7700000000008540003
7áâà1,8,8,8,8áâà1,8,8,9,9,9
7700000000008540004
9áâà1,10,10,11,12,12áâà1,12áâà2,12
7700000000008540005
12áâà2,12áâà3,12áâà4,12,12
7700000000008540006
12áâà1,12áâà2,12,13,13,13,13
7700000000008540007
13áâà1,13áâà2,14,14,15,15áâà2,16,17
7700000000008540008
17áâà1,17áâà2,17,17,17áâà1,21
7700000000008540009
21áâà1,21,21,21áâà2,21áâà3,21,23
7700000000008540010
23,25,25,25áâà1,25áâà2,25,25,25
7700000000008540011
25áâà1,25áâà2,27,27,27áâà2,27
7700000000008540012
1,1áâà1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000008550001
2áâà6,2áâà7,2ª1,2,2áâà1,3,3áâà1
7700000000008550003
3áâà2,3áâà3,4,4áâà1,4áâà2,5,6ª1,6ª2
7700000000008550004
6ª2áâà1,6,7ª1,7ª2,8áâà1,8áâà2,9
7700000000008550005
10ª1,10ª2,11,12,15,15áâà1,17,17áâà1
7700000000008550006
17áâà2,17,17,17,17,19,19áâà1,19áâà2
7700000000008550007
7700000000008550002
2,6,6áâà3,6áâà4,13,15áâà2,15áâà3,15/8
7700000000008560001
17,19,23,23áâà2,27,29,29áâà2
7700000000008560002
28,29,30,31,32,32ª1,32ª1áâà1,34,34ª2
7700000000008580001
14,14áâà1,16,17,17áâà1,17áâà2,17ª1áâà2
7700000000008580002
18,19,20ª1,20ª2,20ª2áâà1,21,22ª1,22ª2
7700000000008580003
22ª3,22ª3áâà1,22ª3áâà2,23,24,25,26,27
7700000000008580004
35ª1,35ª1áâà2,35ª2,36,36áâà1,36áâà6,37
7700000000008580005
38,38ª2,39,40,41,43,43áâà1,43ª1áâà2
7700000000008580006
1áâà1,1ª1,1ª1,1ª2,1ª3,1ª5,1ª6,1ª7,1ª8
7700000000008580008
1ª11,1ª14,2,2ª1,3,4ª1,4ª2,4ª2áâà10,4ª3
7700000000008580009
5,5áâà1,6,7,8ª1,8ª2,8ª3,8ª4,8ª4áâà2,9
7700000000008580010
10ª1,10ª1áâà1,10ª2,11,12,13,13áâà1
7700000000008580011
13áâà2,13áâà3
7700000000008580012
11/38,13ª1,13ª2,15ª1,15ª2
7700000000008590001
1/18áâà1,1/18áâà2,1/18áâà3,1/18áâà4
7700000000008590002
1/18áâà5,1/18áâà6,1/18áâà7,1/18áâà9
7700000000008590003
1/18áâà12,1/18áâà13,1/18áâà15
7700000000008590004
1/18áâà16,1/18áâà19,1/18áâà26
7700000000008590005
1/18áâà27,1/18áâà28,1/18áâà29
7700000000008590006
1/18áâà30,1/18áâà31,1/18áâà32
7700000000008590007
1/18áâà33,1/18áâà34,4áâà1,4áâà2,4áâà3
7700000000008590008
7700000000008590009
7700000000008590010
4áâà15,4áâà16,4áâà17,4áâà18,4áâà19
7700000000008590011
4áâà20,4áâà21,4áâà22,4áâà1,5áâà1
7700000000008590012
5áâà2,5áâà3,5áâà4,5áâà7,5áâà8,6ª6,6ª7
7700000000008590013
6ª8,6ª9,6ª13,6ª16,6ª30,7áâà1,7áâà2
7700000000008590014
7áâà4,7áâà5,7áâà6,7áâà8,7áâà9,7áâà21
7700000000008590015
7700000000008600001
123001
2/16áâà1,2/16áâà2,3áâà1,5,6áâà1,6áâà2
7700000000008600002
6áâà3,8,10áâà1,10áâà2,12áâà2
7700000000008600003
1,2,3,4ª1,4ª2,5,5áâà2,5áâà3,5áâà4
7700000000008610001
121351
45268562000
5áâà5,5áâà6,6,6ª1,6ª2,6ª2áâà2,7,10ª1
7700000000008610002
10ª1áâà1,10ª3,12,12
7700000000008610003
13áâà1,13áâà2,14ª1,14ª1,14ª1,14ª2
7700000000008610004
121359
14ª2áâà3,15,15áâà2,15áâà3,16,17,18ª1
7700000000008610005
18ª2,18ª3,19,19áâà1,20,21,22ª1,22ª2
7700000000008610006
22ª2,23,23áâà2,23áâà3,23áâà4,24,26ª1
7700000000008610007
26ª2,28,28áâà2,32,34
7700000000008610008
1ª1,1ª3,1ª5,3,3áâà1,3áâà2,5,14,21
7700000000008640001
21áâà1,21áâà1,21áâà2,21áâà2
7700000000008640002
21áâà3,21áâà3,21áâà4,21áâà5
7700000000008640003
21áâà6,21áâà11,21áâà12,21áâà1
7700000000008640004
2,2áâà1,2ª1,2ª1áâà1,2ª1áâà2,4,6,6ª1
7700000000008660001
119618
6ª1áâà1,6ª1áâà2,6ª1áâà3,8,10,10ª1
7700000000008660002
10ª1áâà1,10ª1áâà2,10ª2,10ª3,12,12ª1
7700000000008660003
12ª1áâà1,12ª2,14,14ª1,14ª1áâà1
7700000000008660004
14ª1áâà2,16,17áâà1,17áâà2,24,24áâà1
7700000000008660005
26ª2,26ª3,26,32,38
7700000000008660006
54,56,56,56,58,58áâà1,58áâà2,58
7700000000008660007
19,42,44,48,48áâà1,48áâà3,48ª1
7700000000008660008
48ª1áâà1,48ª1áâà3,48ª2,48ª3,50,52,52ª1
7700000000008660009
52ª2,52ª2áâà1
7700000000008660010
3áâà1,3áâà2,3áâà3,3áâà3,3áâà4,3áâà5
7700000000008670001
7700000000008670002
7700000000008670003
7700000000008670004
3áâà22,3áâà23,3áâà24,3áâà25,3áâà26
7700000000008670005
3áâà27,3áâà28,3áâà29,3áâà30,3áâà31
7700000000008670006
3áâà32,3áâà32,3áâà33,3áâà34,3áâà35
7700000000008670007
3áâà36,3áâà37,3áâà38,3áâà1
7700000000008670008
2áâà1,2áâà2,4,6ª1,6ª2,6ª2áâà1,8,8ª1
7700000000008670009
5,11áâà1,18áâà1,18áâà2,18áâà3,18áâà4
7700000000008680001
18áâà6,18áâà9,18áâà13,18áâà14
7700000000008680002
3,4áâà2
7700000000008690001
123104
5,7,8/15áâà1,10áâà1,16/6áâà1
7700000000008690002
8,9,10,11
7700000000008710001
2,3,9,9áâà1,9áâà2,11áâà1,11áâà2,25
7700000000008720001
5,7,8,9,10,10,12,12_14áâà2,14
7700000000008730001
117042
1áâà2,1ª1,1ª2,1ª2áâà1,2/12áâà1
7700000000008740001
2/12áâà2,2/12áâà3,2/12áâà4,2/12áâà7
7700000000008740002
2/12áâà9,4áâà1,5,6
7700000000008740003
2,2áâà1,3,3áâà3,6,6áâà1,8,8áâà1
7700000000008750001
3,3áâà2,3áâà3,3áâà6,3áâà7,3áâà18
7700000000008760001
3áâà19,3áâà20,3áâà21,4,4ª2,4ª2áâà2
7700000000008760002
5áâà7,5ª1,5_,5_áâà1,7ª1,7ª2,7ª2,7ª3
7700000000008760003
8ª4,8ª4áâà3,8,9,9áâà2,9ª2,10ª1,10ª2
7700000000008760004
10ª3,11ª1,11ª2,12ª1,12ª2,12ª2áâà3,14ª1
7700000000008760005
14ª2,14ª3,14ª4
7700000000008760006
8,8áâà3,9áâà1,11,11áâà1,12áâà1,12áâà2
7700000000008770001
107150
13áâà1,13áâà3,13áâà4,13áâà5,13ª1,13ª2
7700000000008770002
15,15áâà3,16,16áâà1,17ª1,17ª2,17ª3,18
7700000000008770003
18ª2,18ª4,18ª5,18ª5áâà1,18ª8,18ª9
7700000000008770004
18ª10,18ª11,18ª12,18ª13,18ª14,18,19
7700000000008770005
20,21ª2,22,22áâà1,22ª1,22ª2,22ª4,22ª5
7700000000008770006
22ª6,22ª6áâà1,22,22áâà1,23,23áâà3,24
7700000000008770007
24áâà1,24áâà3,24ª1,24ª1áâà5,24ª2,24ª3
7700000000008770008
24ª4,24ª5,25,25,27,27áâà2,27áâà3
7700000000008770009
27áâà4,27áâà5,27áâà6,29
7700000000008770010
2/30,4/37ª2,4/37ª3,4/37ª4,4/37ª5,6
7700000000008770011
107370
6áâà2,6áâà3,6ª1,6ª2,6ª3,6ª4,6ª5,6ª6
7700000000008770012
6ª8,6ª8,6ª8áâà1,6ª8áâà2,10ª1,10ª2
7700000000008770013
10ª3,10ª4,10ª5,10ª6,10ª6áâà1,10ª7,10ª8
7700000000008770014
10ª9,14ª1,14ª2,14ª3,14ª4,14ª4áâà2,14ª6
7700000000008770015
14ª7,14ª7,14ª8,14ª10
7700000000008770016
1áâà1,3áâà1,3áâà2,3áâà3,3áâà4,5áâà1
7700000000008790001
7áâà1,7áâà2,7áâà3,7áâà4,9áâà1,11áâà1
7700000000008790002
11áâà2,13,15áâà2,15áâà3,15áâà6,15áâà7
7700000000008790003
7700000000008790004
15ª1,15ª2,15ª4,15ª5
7700000000008790005
35/2,37,38ª1,38ª2,38ª3,38ª4,38ª5,38ª6
7700000000008800001
117209
36áâà1,36áâà2,36áâà3,36áâà4
7700000000008800002
40ª3áâà1,40ª4,40ª4áâà1,40ª5,41,42ª1
7700000000008800003
42ª2,42ª3,43,44ª1,44ª2,44ª3,44ª4
7700000000008800004
45áâà1,45áâà2,45ª1,45ª1áâà1,45ª1áâà2
7700000000008800005
45ª2,45ª3,46ª1,46ª2,46ª2áâà1,46ª2áâà2
7700000000008800006
46ª3,47áâà1,47ª1,47ª2,48,49,50,51ª1
7700000000008800007
51ª2,52ª1,52ª2,52ª3,52ª4,52,53áâà1
7700000000008800008
53ª1,53ª2,53ª3,54ª1,54ª1áâà1,54ª1áâà2
7700000000008800009
54ª2,54ª3
7700000000008800010
7700000000008800011
21áâà6,21áâà7,21áâà8,21ª1,21ª2,23
7700000000008800012
23áâà1,23,25,27,29,31,31ª1,31ª1áâà1
7700000000008800013
31ª2,31ª2áâà1,33ª1,33ª2,33ª2áâà1,33ª3
7700000000008800014
33ª3áâà1
7700000000008800015
7700000000008800016
1ª1,1ª2,1ª3,1ª4,1ª4áâà5,2ª,2áâà1
7700000000008800017
2ªáâà2,2ª2,3ª1,3ª1áâà2,3ª2,3ª6
7700000000008800018
3ª6áâà2,3ª7,3ª8,4ª1,4ª2,4,5,5ª2
7700000000008800019
5ª2áâà2,5ª3,5ª3áâà2,5,5,6,6ª,6áâà2
7700000000008800020
7ª1,7ª1áâà2,7ª5,7,8ª1,8ª2,9,9ª2,10
7700000000008800021
10ª,10ªáâà2,10áâà3,11ª1,11ª2,11ª3
7700000000008800022
12,12áâà3,12áâà4,12áâà5,12áâà6,12áâà7
7700000000008800023
12áâà8,12áâà9,12áâà18,12áâà29,12áâà45
7700000000008800024
16,18,18ª1,18ª2,18ª2áâà1,20,20ª1
7700000000008800025
20ª1áâà1,20ª1áâà2,22ª1,26ª1,26ª2,28ª1
7700000000008800026
28ª2,28ª2áâà1,30,30áâà1,30ª2,32ª2,34ª1
7700000000008800027
39,39áâà1,40ª1,40ª2,40ª2áâà1,40ª3
7700000000008800028
36áâà5,36áâà6,36áâà7,36áâà8
7700000000008800029
36áâà9,36áâà10,36áâà13,36áâà14
7700000000008800030
36áâà1,36
7700000000008800031
1,2,2áâà2,4,5,7
7700000000008810001
2,3ª1,3ª2,3ª2áâà1,5,5áâà2,5áâà3,5áâà4
7700000000008840001
129301
45280552000
5áâà5,7,8/18,9,10,10áâà2,10ª2,10ª2áâà1
7700000000008840002
10ª2áâà2,10ª2áâà3,11,12,12ª2,14ª1,14ª2
7700000000008840003
15,15áâà1,15áâà2,16,16áâà2,16áâà3,17
7700000000008840004
18,18áâà2,19áâà3,19ª1,19ª1áâà2,19ª2
7700000000008840005
19ª3,20,20,20,21,22,22áâà1,23,25
7700000000008840006
26,27áâà1,27áâà2,27áâà3,27áâà4,27áâà5
7700000000008840007
27áâà6,27áâà7,27áâà8,27áâà9,27áâà1
7700000000008840008
4áâà1,4áâà2,4áâà4,4áâà5,4áâà6,4áâà7
7700000000008840010
129366
4áâà8,4áâà9,4áâà10,4áâà11,4áâà13
7700000000008840011
4áâà14,4áâà15
7700000000008840012
1/20,2,2,4,6,7,7áâà3,9,11,15,15ª12
7700000000008850001
15,19
7700000000008850002
10,10áâà2,12,21,21áâà1,21,21áâà3
7700000000008850003
21áâà4,21áâà5,21áâà7,21áâà14
7700000000008850004
21áâà18,21áâà19,21áâà20,21áâà21
7700000000008850005
21áâà22,21áâà23,21áâà24,21áâà25
7700000000008850006
21áâà26,23,23áâà1,25ª1,25ª2,25ª3,25ª4
7700000000008850007
27,27áâà1
7700000000008850008
1,1áâà1,2/31,3áâà8,4,4áâà1,4áâà4,4áâà5
7700000000008860001
105187
4áâà6,4áâà7,4áâà12,7,8,9,10,11,12
7700000000008860002
13áâà1,14,14áâà1,14áâà3,14áâà4,14áâà5
7700000000008860003
14áâà6,14áâà7,16,18,21,21áâà2,25,26
7700000000008860004
27,28áâà1,29,30,30áâà1,31áâà1
7700000000008860005
40áâà1,40áâà2
7700000000008860009
1,1áâà1,2,3,4,5,6,7,8,9,10,11,12,13
7700000000008890001
13,13áâà1,14,15áâà1,15áâà2,15
7700000000008890002
7700000000008890003
7700000000008890004
15áâà9,15áâà10,15áâà11,15áâà12
7700000000008890005
15áâà13,15áâà14,15áâà15,15áâà16
7700000000008890006
15áâà17,15áâà18,15áâà19,15áâà20
7700000000008890007
15áâà21,16,17áâà1,17áâà2,17áâà3
7700000000008890008
17áâà4,17áâà5,17,17áâà1,18,19áâà1,20
7700000000008890009
22,24,24áâà1,24áâà2,24
7700000000008890010
1ª1,1ª1áâà1,1ª1áâà2,1ª1áâà3,1ª1áâà4
7700000000008900001
1ª1áâà5,1ª1áâà6,1ª1áâà7,1ª1áâà8
7700000000008900002
1ª1áâà9,1ª1áâà10,1ª1áâà11,1ª1áâà12
7700000000008900004
1ª1áâà13,1ª1áâà14,1ª1áâà15,1ª1áâà16
7700000000008900005
1ª1áâà19,1ª1áâà20,1ª2
7700000000008900006
2,2áâà1,2áâà2,2áâà2,2áâà2,2áâà4
7700000000008900008
2áâà5,2áâà6,2áâà7,2áâà10,2áâà11,2áâà12
7700000000008900009
7700000000008900003
2áâà14,2áâà17,2áâà18,2áâà19,2áâà20
7700000000008900010
2áâà21,2áâà22,2áâà23,2áâà24,2áâà25
7700000000008900011
2áâà28,2áâà28,2áâà30,2áâà36,2áâà37
7700000000008900012
2áâà38,2áâà39,2áâà40,2áâà42,2áâà48
7700000000008900013
2áâà49,2áâà50,2áâà52,2áâà55,2áâà56
7700000000008900014
2áâà57,2áâà58,2áâà60,2áâà61,2áâà63
7700000000008900015
2áâà66,2áâà67,2áâà69,2áâà71,2áâà75
7700000000008900016
2áâà85,2áâà88,2áâà91,2áâà92,2áâà94
7700000000008900017
2áâà95,2áâà96,2áâà97,2áâà98,2áâà99
7700000000008900018
2áâà100,2áâà101,2áâà102,2áâà103
7700000000008900019
2áâà104,2áâà105,2áâà106,2áâà107
7700000000008900020
2áâà108,2áâà109,2áâà110,2áâà111
7700000000008900021
2áâà114,2áâà115,2áâà116,2áâà117
7700000000008900022
2áâà123,2áâà125,2áâà126,2áâà129
7700000000008900023
2áâà130,2áâà133,2áâà134,2áâà135
7700000000008900024
11áâà1,13,13áâà1,13áâà2,13áâà3,13áâà4
7700000000008900025
119633
18ª1,18ª2,18ª3,18ª3áâà1,18ª3áâà2,18ª4
7700000000008900028
45268577000
19,20,20áâà1,20áâà2,20ª1,20ª1áâà1,20ª2
7700000000008900029
21,21áâà1,21áâà2,23,23,25,25áâà1
7700000000008900030
25áâà2,27,27áâà1,27áâà2,27ª1,29,29áâà1
7700000000008900031
29ª1,31,33,33áâà1,33áâà2,33ª1,35,35ª1
7700000000008900032
47áâà1,47áâà2,47áâà3,47áâà4,61
7700000000008900007
119634
61áâà1
7700000000008900033
14,17,17áâà3,17_,30,30,32,34,36
7700000000008900034
36_,37,37áâà1,37ª1,37ª2,37ª3,38,39,40
7700000000008900035
41,41áâà1,42ª1,43,43áâà1,43ª1,43ª2,44
7700000000008900036
44áâà1,44áâà2,44áâà3,44áâà4,44áâà5
7700000000008900037
2áâà136,6
7700000000008900038
44ª1,44ª1áâà1,45,45áâà1,45áâà2,46
7700000000008900039
46áâà1,47,47,48,48ª1,50,51,51áâà1
7700000000008900040
10áâà9,12,12áâà2,13áâà1,13áâà2,14
7700000000008900042
14áâà1
7700000000008900043
11áâà1,11áâà3,13,13,13áâà1,13,15
7700000000008920001
1,1áâà1,2,3,3,4,4áâà1,4,5,6,7,8,9,10
7700000000008930001
127276
45280567000
10,11,12,13,14,14ª1,15,16,17,18,18
7700000000008930002
18áâà1,19,20,21,21,21áâà2,21áâà3
7700000000008930003
21áâà4,22,23,24,24áâà1,24áâà2
7700000000008930004
24áâà3,24,24áâà1,24áâà2,24áâà3
7700000000008930005
24áâà1,24áâà2,24áâà3,26,26
7700000000008930006
áâà6,37/2ª1,37,37áâà1,37,37,39
7700000000008940001
39áâà1,39,39,39áâà1,41ª7
7700000000008940002
4áâà9,4áâà12,4áâà13,4áâà14,4áâà15
7700000000008940003
4áâà54,4áâà55,4áâà59,4áâà60,4áâà62,6,8
7700000000008940004
10,10,10áâà1,10áâà2,10áâà3,10
7700000000008940006
10áâà1,12,14,14,14,16,16,25áâà1
7700000000008940007
7700000000008940008
7700000000008940009
7700000000008940010
7700000000008940011
25áâà20,25áâà21,25áâà22,25áâà23
7700000000008940012
7700000000008940013
25áâà28,25áâà29,25áâà30,27,29,29ª1
7700000000008940014
4,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5,4áâà6
7700000000008940015
4áâà7,4áâà8,4áâà11,4áâà16,4áâà17
7700000000008940016
31áâà9,31áâà10,31áâà11,31áâà12,31áâà13
7700000000008940017
31áâà14,31áâà15,31áâà18,31áâà19
7700000000008940018
31áâà20,31áâà21,31áâà22,31áâà26
7700000000008940019
31áâà27,31áâà29,31áâà30,31áâà39
7700000000008940020
1,3,5,5,5,7,9,9áâà1,9áâà2,11,11
7700000000008940021
127427
11áâà16,11áâà17,11áâà18,11áâà35
7700000000008940022
11áâà36,11áâà39,11áâà40,11áâà41
7700000000008940023
11áâà42,11áâà52,13,13áâà1,13áâà2
7700000000008940024
29ª2,29ª3,33ª4,33ª5,33ª6,33ª7,33ª7áâà2
7700000000008940025
11áâà2,11áâà4,11áâà5,11áâà8
7700000000008940005
7700000000008940033
5,7,11,11áâà2,12,12áâà6,14,16,16ª1
7700000000008950001
2áâà1,2/6,4,4áâà3,4áâà4,4áâà5,4áâà6
7700000000008970001
4áâà7,4áâà8,4ª2,6,6áâà4,6áâà5,7áâà1
7700000000008970002
7700000000008970003
7áâà11,7áâà38,7áâà74,7áâà137,7áâà138
7700000000008970004
7,8/31,9,11
7700000000008970005
3,3áâà2,3áâà2,3áâà3,3áâà4,3áâà6,3áâà7
7700000000008980001
3áâà8,3áâà10,3áâà11,3áâà12,3áâà13
7700000000008980002
3áâà14,3áâà15,5áâà3,5áâà4,5áâà4
7700000000008980003
5áâà4,5áâà4,5áâà8,5áâà12,5áâà13
7700000000008980004
5áâà15,5áâà24,5áâà25,5áâà39,5áâà40
7700000000008980005
5áâà43,5áâà44,5áâà45,5áâà46,5áâà47
7700000000008980006
5áâà48,5áâà49,5áâà50,5áâà50,5áâà53
7700000000008980007
5áâà54,5áâà56,5áâà58,5áâà59,5áâà61
7700000000008980008
5áâà62,5áâà63,5áâà66,5áâà67,5áâà70
7700000000008980009
5áâà71,5áâà72,5ª1,5ª2,5ª3,5ª4,5ª5,5ª6
7700000000008980010
5ª7,5ª8,5ª9,5ª10,5ª11,5ª12,5ª16,5ª17
7700000000008980011
5ª19,5ª20,5ª21,5ª22,5ª27,5ª28,5ª29
7700000000008980012
5ª33,7áâà3,7ª1,7ª2,8,8áâà1
7700000000008980013
8,9,10,10,11,12,13,13áâà1,15,15áâà1,17
7700000000008990001
123098
2,2áâà2,2áâà3,2ª2,2ª2áâà1,2ª2áâà2
7700000000008990002
3áâà1,3ª1,3ª2,3ª2áâà2,3ª3,4,4,5áâà2
7700000000008990003
5ª1,5ª2,5ª3,6,7ª1,7ª2
7700000000008990004
3,3/15,3,4,4áâà2,4,5,5áâà2,5ª1
7700000000009000001
129085
5ª2áâà1,5ª3,6ª1,6ª2,6ª2áâà1,6ª2áâà2
7700000000009000002
6ª2áâà3,7,8,8ª1,9,10áâà1,10áâà2,10áâà3
7700000000009000003
10áâà4,10áâà5,10áâà6,10áâà7,10áâà15,11
7700000000009000004
11áâà1,11áâà2,11áâà3,11áâà4
7700000000009000005
11áâà5,11áâà6,11áâà8,11áâà11
7700000000009000006
11áâà13,11áâà14,11áâà15,11áâà15
7700000000009000007
11áâà16,11áâà17,11áâà18,11áâà19
7700000000009000008
11áâà21,11áâà23,11áâà24,11áâà25
7700000000009000009
11áâà31,11áâà36,11áâà44,11áâà45
7700000000009000010
11áâà46,11áâà47,11áâà48,11áâà49
7700000000009000011
11áâà50,11áâà51,11áâà52,11,12áâà1
7700000000009000012
7700000000009010001
2áâà3,10áâà4,15,17,22,27,29,33áâà1
7700000000009020001
33áâà2,35,36,38áâà1,40,40áâà1,41,42,43
7700000000009020002
44,55,58,60,62,66
7700000000009020003
1áâà1,5,9áâà1,9áâà2,19/18áâà1
7700000000009030001
123056
19/18áâà3,19/18áâà4,19/18áâà5
7700000000009030002
21/27áâà1,21/27áâà1,21/27áâà2
7700000000009030003
21/27áâà3,21/27áâà4,29,29áâà3
7700000000009030004
29áâà4,31,37áâà1,37áâà2,39áâà2,39áâà3
7700000000009030005
39áâà4,41áâà1,43,43áâà2,43áâà3,43áâà4
7700000000009030006
7700000000009030007
1/13,3_5,3_5áâà2,4,4,4áâà2,6,6áâà1
7700000000009040001
3,4,7,7áâà2,10áâà3,10ª1,10ª2
7700000000009050001
119180
1áâà4,2/6,3,5,6áâà3,6áâà4,6áâà1
7700000000009060001
6áâà6,7,8,10áâà1,12,14áâà1
7700000000009060002
11,17,19,19áâà2,23áâà1,23áâà2,23áâà3
7700000000009060003
23áâà4,23áâà6,25áâà2,25áâà3
7700000000009060004
27/4,29,29áâà2,29áâà4
7700000000009060005
23áâà2,23áâà3,23áâà4,24áâà1,24áâà2
7700000000009070001
24áâà3,24áâà4,24áâà5,25,26áâà1,26áâà2
7700000000009070002
26áâà3,27/14,28,30/1,30/1áâà2,31/13,32
7700000000009070003
34,36,36áâà2,38,42/14
7700000000009070004
44,44áâà2
7700000000009070005
2áâà1,2áâà3,2áâà4,4,4áâà2,5_7áâà1
7700000000009070006
8áâà1,10áâà1,10áâà2,10áâà3,12áâà4,13
7700000000009070007
13áâà2,13áâà5,14,15,15,16,17,17áâà2
7700000000009070008
18áâà1,19,19,20áâà1,20áâà2,20
7700000000009070009
21/13áâà1,21/13áâà2,22áâà1,22áâà2
7700000000009070010
2áâà4,4,4áâà2,6áâà1,6áâà2,8,8áâà2,21
7700000000009080001
1,2,2,3,3,3,4,5,5ª2,7,8,9,10,10,11
7700000000009090001
12,32áâà6,32áâà9
7700000000009090002
7700000000009100001
2áâà7,2áâà8,2áâà9,2áâà10,2áâà11,2áâà12
7700000000009100002
2áâà13,2áâà14,2áâà15,2áâà17,2áâà18
7700000000009100003
2áâà19,2áâà20,2áâà21,2áâà22,2áâà23
7700000000009100004
2áâà24,2áâà25,2áâà26,2áâà27,2áâà28
7700000000009100005
2áâà29,2áâà30,3,5,7,9,11,13
7700000000009100006
1,2,3,4,5,6ª1,6ª2,7ª1,7ª2,8,8áâà2
7700000000009110001
8áâà3,9,10áâà1,10áâà2,10áâà3,10áâà5
7700000000009110002
10áâà6,10áâà7,10áâà8,10áâà9,11,11
7700000000009110003
2,8áâà1,8áâà2,10áâà2,10áâà3,10áâà4
7700000000009120001
10áâà5,10áâà6,10áâà7,10áâà8,11,11áâà2
7700000000009120003
12,12áâà2,13,14,14áâà1,16áâà1,16áâà2
7700000000009120004
16áâà3,16áâà4,16áâà5,16áâà6,22,22áâà4
7700000000009120005
26/6,30áâà1,30áâà2,30áâà3,30áâà4
7700000000009120006
51áâà1,51áâà2
7700000000009120007
42áâà1,44
7700000000009120002
107061
1ª1,1ª1,1ª2,1ª3,1ª4,1ª4áâà2,1ª5,1ª6
7700000000009130001
117403
45296555000
1,2,2ª2,2,2áâà2,2,2áâà2,2,3ª1
7700000000009130002
3ª2,3ª4,3ª4áâà2,3ª4áâà3,4ª1,4ª1áâà2
7700000000009130003
4ª2,4ª2áâà2,4,4áâà2,5,5ª1,5ª2
7700000000009130004
5ª2áâà2,5ª3,5ª3áâà1,5ª4,5ª5,5ª6,6,6ª1
7700000000009130005
7ª1,7ª2,9,9áâà2,9ª1,9ª2,9ª4,9,9,10
7700000000009130006
10áâà2,11ª1,12áâà1,12áâà2,12áâà3
7700000000009130007
12áâà4,13,14,14áâà2,14áâà3,15,17
7700000000009130008
18áâà1,18áâà2,18áâà3,18áâà4,18áâà5
7700000000009130009
18áâà6,18áâà7,18áâà8,18áâà9,18áâà10
7700000000009130010
7700000000009130011
18áâà15,19,20,20áâà2,20áâà3,20áâà6
7700000000009130012
20áâà7,20áâà8,20áâà9,20áâà10,20áâà12
7700000000009130013
20áâà13,21,22,22áâà2,22áâà3,22áâà4
7700000000009130014
22áâà5
7700000000009130015
14áâà1,14ª1,14ª1áâà2,14ª1áâà3,14ª2
7700000000009140001
14ª3,14ª4,14ª5,14ª5áâà3,14ª5áâà4,14ª6
7700000000009140002
14ª6áâà3,14ª6áâà4,14ª7,14,14,14
7700000000009140003
16ª1,16ª3,16,16áâà2,18,18,18
7700000000009140004
2,2,2ª1,2ª2,2ª3,2ª4,2ª5,2ª6
7700000000009140005
117546
5áâà1,6áâà1,6áâà2,6áâà2,6áâà3,6áâà6
7700000000009140006
6ª1,6ª1áâà2,6ª1áâà3,6ª1áâà4,6ª2,6ª2
7700000000009140007
6ª3,6ª4,7,8,8áâà2,8,8áâà2,8áâà3
7700000000009140008
8áâà4,8áâà5,10ª1,10ª2,10ª2áâà2,10ª3
7700000000009140009
10ª3áâà2,10ª4,10,10áâà1,10áâà2,10
7700000000009140010
10áâà2,10,11áâà1,11áâà2,11,19ª1,19
7700000000009140011
2,2/2,2/2áâà1,2/2áâà2,2/2áâà3,2/2áâà5
7700000000009150001
2/2áâà6,2/2áâà7
7700000000009150002
14áâà1,14áâà2,14áâà3,14áâà6,14áâà10
7700000000009150003
127015
14áâà11,14áâà16,14áâà18,19,19áâà1
7700000000009150004
19áâà3,19áâà4,19áâà5,19áâà6
7700000000009150005
1,1,2,3,4,5,6,7,8,9,10,11,12,12áâà1
7700000000009170001
45277584000
13,14,14,15,16,17,19,20,21áâà1,21áâà2
7700000000009170002
22,23,25,26,27,28,29,30,31,31áâà3,32
7700000000009170003
33,34,35,36áâà1,36áâà2,36áâà6,36áâà8
7700000000009170004
37,38,39,41,43,45,47,49,51,53,55
7700000000009170005
57áâà1,57áâà2,59,61,63,65,67
7700000000009170006
3,5,7,12áâà1,12áâà2,14áâà1,14áâà5
7700000000009180001
14áâà9,16áâà1,16áâà2,16áâà3,18
7700000000009180002
15,17,17,17,19áâà1,22,22áâà1,22áâà2
7700000000009190001
24,24ª2áâà1,24ª2áâà2,24,26ª1,26ª2,26
7700000000009190002
28,29áâà1,30,30áâà1,30,34ª1,34ª2
7700000000009190003
34ª2áâà1,36ª1,36ª2,38ª1,38ª2,38ª3,38ª4
7700000000009190004
38ª4áâà1,38,40ª1,40ª1áâà1,40ª1áâà2
7700000000009190005
1,2ª1,2ª2,2ª2áâà1,3,3,4,4ª1,4ª1áâà1
7700000000009190006
117485
4ª1áâà2,4ª2,4ª3,5,5áâà1,5áâà1,5áâà2
7700000000009190007
5áâà3,5,5áâà1,5áâà2,5áâà3,5áâà1
7700000000009190008
5áâà2,7,7,7áâà1,8áâà1,9,9áâà2,10
7700000000009190009
10,11,11áâà1,11áâà2,11áâà3,11áâà4,12
7700000000009190010
12áâà1,14ª1,14ª2,16,18,18áâà2
7700000000009190011
2,3,4,5,5áâà1,6,6,8,9,10,10áâà1,11
7700000000009200001
7700000000009200002
7700000000009200003
7700000000009200004
7700000000009200005
7700000000009200006
11áâà23,11áâà24,11áâà25,11áâà26
7700000000009200007
11áâà27,11áâà28,11áâà29,11áâà30
7700000000009200008
11áâà31,11áâà32,11áâà33,11áâà34
7700000000009200009
11áâà35,11áâà36,11áâà37,11áâà38
7700000000009200010
11áâà39,11áâà40,11áâà41,11áâà42
7700000000009200011
11áâà43,11áâà44,11áâà45,11áâà46
7700000000009200012
11áâà47,12,13,14,15,16,17,17áâà1,18
7700000000009200013
1,3,5,5áâà2,7,9áâà1,9ª1,9ª2,9ª2áâà2,11
7700000000009210001
11áâà4,15,15áâà2,15áâà3,15áâà4,17,17
7700000000009210002
19,19áâà2,21,21áâà3,23áâà1,23áâà2,53ª1
7700000000009210004
53ª2,53ª3,65/68,65/68áâà2,67áâà1
7700000000009210005
67áâà2,67áâà3,67áâà4,69_71áâà1,73,75
7700000000009210006
75áâà2,75áâà3,75áâà4,75áâà5,77,77áâà2
7700000000009210007
79,79áâà2,89,89áâà2,89áâà3,89áâà4,89ª2
7700000000009210008
89,91,93,95,97,97áâà1,97áâà2,97áâà3
7700000000009210009
97áâà6
7700000000009210010
7700000000009210003
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2/18,4
7700000000009210011
45280561000
4áâà2,4ª1,6,6áâà1,6áâà2,6ª3,6ª3áâà1
7700000000009210012
6ª3áâà2,8,10,38áâà2,42,46áâà1,46áâà2
7700000000009210013
46áâà3,46áâà4,56,76áâà1,76áâà2,76áâà3
7700000000009210014
76áâà4,76áâà4,82,84,84áâà2,84,84
7700000000009210015
86,86,86áâà1,86áâà2,86,86áâà2
7700000000009210016
86áâà3,86áâà5,86áâà6,86áâà11,86,86
7700000000009210017
1,2áâà3,2áâà8,2áâà9,2áâà14,4,5,5áâà2
7700000000009230001
5áâà1,6,6áâà1,7,7áâà1,7áâà2,7ª1
7700000000009230002
57,57áâà1,57áâà2,57ª1,57ª1áâà1
7700000000009240001
117292
45293554000
57ª1áâà2,57ª1áâà3,57ª2,57ª2áâà1
7700000000009240002
57ª2áâà2,57ª2áâà3,57ª2áâà4,57ª2áâà5
7700000000009240003
57ª2áâà7,57ª2áâà8,57ª3,57,57áâà1
7700000000009240004
57áâà2,57áâà3,57áâà4,57áâà5
7700000000009240005
57áâà6,57áâà7,57áâà8,57áâà9
7700000000009240006
57áâà10,57áâà11,57áâà1,57áâà2
7700000000009240007
57áâà3,57áâà4,57áâà5,57áâà6
7700000000009240008
57áâà7,57áâà8,57áâà9,57áâà10
7700000000009240009
57áâà11,59,61áâà1,61áâà2,61áâà3
7700000000009240011
61áâà4,61áâà5,61áâà6,61áâà7,61áâà8
7700000000009240012
61áâà9,61áâà11,61áâà12,61áâà13,65
7700000000009240013
65áâà1,65,67
7700000000009240014
7,7áâà1,7,9,9áâà1,9áâà1,9áâà2
7700000000009240015
117312
9áâà3,9áâà4,9áâà5,9áâà6,9áâà7
7700000000009240016
9áâà8,9áâà9,9áâà10,9áâà11,9áâà16
7700000000009240017
9áâà17,9áâà18,9áâà19,9áâà20
7700000000009240018
9áâà21,9áâà22,9áâà23,9áâà24
7700000000009240019
9áâà25,9áâà1,11áâà1,11áâà2,11áâà3
7700000000009240020
11áâà4,13áâà1,13áâà2,13áâà3,13áâà4
7700000000009240021
7700000000009240022
13áâà10,13áâà11,13áâà12,13áâà13
7700000000009240023
13áâà14,13áâà15,13áâà16,13áâà17
7700000000009240024
13áâà18,13áâà19,13áâà20,13áâà21
7700000000009240025
13áâà22,13áâà23,13áâà24,13áâà25
7700000000009240026
13áâà26,13áâà27,13áâà28,13áâà29
7700000000009240027
13áâà30,13áâà31,13áâà32,13áâà33
7700000000009240028
13áâà34,13áâà35,13áâà36,13áâà37
7700000000009240029
13áâà38,13áâà39,13áâà43,13áâà44
7700000000009240030
13áâà45,13áâà46,13áâà47,13áâà48
7700000000009240031
13áâà49,13áâà51,13áâà52,13áâà53
7700000000009240032
13áâà54,13áâà55,13áâà56,13áâà57
7700000000009240033
13áâà58,13áâà59,13áâà60,13áâà61
7700000000009240034
13áâà62,13áâà72,13áâà73,13áâà74
7700000000009240035
13áâà75,13áâà76,13áâà77,13,15,15áâà1
7700000000009240036
17,17áâà1,17,19,21áâà1,21áâà2,21áâà3
7700000000009240037
21áâà5,21áâà8,21áâà9,21áâà13,21áâà18
7700000000009240038
21áâà20,21áâà21,21áâà22,21áâà23
7700000000009240039
7700000000009240040
23áâà5,23áâà6,23áâà7,23áâà8,23áâà9
7700000000009240041
23áâà10,23áâà11,23áâà12,25,25áâà1
7700000000009240042
25áâà2,25ª1,27,29,31,31ª1,31ª1áâà1
7700000000009240043
35ª1,35ª2,35ª2áâà1,37,37,39,39,41/5
7700000000009240044
43,45,45áâà1,47ª1,47ª2,47ª2áâà1,47
7700000000009240045
47áâà1,49ª1,49ª2,51,53ª1,53ª2,53ª3,55/7
7700000000009240046
69/75,69/75áâà1,69,69ª1,69ª2,69ª3
7700000000009240047
117335
45293574000
71áâà1,71áâà2,71áâà3,73,73áâà1,73áâà2
7700000000009240048
75,77,77áâà1,79,79ª1,79,81,81,83
7700000000009240049
83áâà1,85,87,87áâà1,89,91,91ª1
7700000000009240050
91ª1áâà1,91ª1áâà2,91ª2,91,93,93áâà2
7700000000009240051
95,95áâà1,97,97áâà3,97ª1
7700000000009240052
7700000000009240010
119071
64/1áâà1,64/1áâà3,64/1áâà4,64/1áâà5
7700000000009240053
119261
64/1áâà11,64áâà1,66,66áâà2,66áâà4
7700000000009240054
66áâà6,66ª2,66,68ª1,68ª1áâà1,68ª2
7700000000009240055
68ª2áâà1,68ª3,68ª3áâà1,68ª3áâà5,70ª1
7700000000009240056
70ª1áâà1,70ª2,70ª3,72/13
7700000000009240057
74áâà1,74/22,76,78,80,82,84áâà1,84áâà2
7700000000009240058
84ª2,84ª2áâà1,84ª2áâà2,84ª2áâà3
7700000000009240059
84ª2áâà4,84ª4,84ª4áâà1,86,86áâà2
7700000000009240060
52ª1,52ª2,52ª3,52ª3áâà1,52ª4,52ª5,54ª1
7700000000009240061
119296
54ª2,54ª3,54ª4,56,56áâà1,56ª1,56ª2
7700000000009240062
58ª1,58ª2,58ª3,60ª1,60ª2,60ª3,60ª4
7700000000009240063
60ª5,60ª5áâà1,60ª5áâà2,60ª5áâà3,60
7700000000009240064
38áâà1,38áâà4,38áâà5,38ª1,38ª2,38ª3
7700000000009240065
119333
38ª4,38ª5,38ª6,38ª7,38ª8,38ª9,40,42
7700000000009240066
44ª1,44ª2,44ª3,44ª3áâà1,44ª4,46
7700000000009240067
46áâà1,48,48áâà11,48áâà1,48áâà2
7700000000009240068
50áâà1
7700000000009240069
3áâà1,4,4áâà2,4áâà3,4áâà4,4,4,5
7700000000009240070
5áâà2,5áâà5,5áâà6,5áâà7,5áâà8,5áâà9
7700000000009240071
5ª1,5ª1áâà2,5ª1áâà3,5ª1áâà4,5ª1áâà5
7700000000009240072
5ª2,5ª3,5ª3áâà5,5ª3áâà6,5ª3áâà8
7700000000009240073
5ª3áâà9,5,5áâà2,5áâà3,5áâà4,5áâà5
7700000000009240074
5,5,6,6
7700000000009240075
8,10,12,14,16,16áâà1,16áâà2,18,20,24
7700000000009240076
24áâà1,24ª1,26áâà1,26áâà2,28áâà1
7700000000009240077
28áâà2,28áâà3,28áâà4,32áâà1,32áâà2,34
7700000000009240078
34/5
7700000000009240079
5,5áâà1,9/25,9/25áâà1,11,13,15,17
7700000000009250001
17áâà2,19,23,23áâà2,23áâà3,23áâà4
7700000000009250002
23áâà5,23áâà9,23áâà10,23áâà11,25áâà4
7700000000009250003
25áâà12,25áâà13,25áâà15,25áâà17
7700000000009250004
25áâà1,25,25áâà2,25áâà3,27,27áâà1
7700000000009250005
27áâà3,27áâà4,27áâà9
7700000000009250006
6áâà2,6áâà1,6áâà2,10,10áâà1,10áâà2
7700000000009250008
127644
10áâà3,10,10áâà1,10áâà3,10áâà4
7700000000009250009
10áâà5,10áâà6,10áâà7,10áâà9
7700000000009250010
10áâà9,10áâà13,10áâà15,10áâà16
7700000000009250011
10áâà17,10áâà18,10áâà23,14,14áâà1
7700000000009250012
14áâà2,16áâà1
7700000000009250013
3,4,4áâà2,5,6,6áâà3,7,7áâà2,7áâà3
7700000000009260001
7áâà4,8,8áâà2,8áâà5,9,9áâà1,9ª1
7700000000009260002
10áâà2,10ª1,11,12,13,13áâà2,13áâà3
7700000000009260003
13áâà1,13ª1,14,15,16áâà1,16áâà2
7700000000009260004
16áâà3,16áâà4,16áâà5,16áâà6,16áâà7
7700000000009260005
16áâà8,16áâà9,16áâà1,17,17áâà4
7700000000009260006
17áâà1,17ª1,18,20,21,22,22áâà2
7700000000009260007
3áâà1,6,6áâà2,8áâà1,8/18,8/18áâà2,10
7700000000009270001
11/19,14áâà8,18áâà2,19áâà1,20,21áâà2
7700000000009270002
21ª125,29,29áâà1,29áâà2,30,30áâà4,31
7700000000009270003
32/75áâà1,32/75áâà2,33,33áâà2,37áâà1
7700000000009270004
7700000000009270005
1áâà1,2áâà1,2áâà2,2áâà3,2áâà7,2áâà8,3
7700000000009290001
3,4áâà1,4áâà4,4,5,6áâà1,6áâà5,6áâà6
7700000000009290002
6áâà21,6áâà1,7,7áâà1,8_10áâà1
7700000000009290003
8_10áâà2,8_10áâà7,8_10áâà15,9,9áâà1
7700000000009290004
9áâà2,9áâà3,10,10,10,10,11áâà1
7700000000009290005
12áâà1,12áâà5,13,13áâà1,14/7,14/7
7700000000009290006
15áâà1,16,17/9áâà1,18,18áâà2,19/12
7700000000009290007
19áâà1,20áâà1,20áâà2,20áâà3,20áâà22
7700000000009290008
20áâà23,21áâà1,22,23,23áâà1,24,25áâà1
7700000000009290009
25áâà2,26,27áâà1,28ª1áâà1,29áâà1
7700000000009290010
31áâà1,31áâà2,33áâà1
7700000000009290011
1,1áâà2,2,2áâà1,2áâà2,2áâà3,2,2,3
7700000000009310001
117133
3áâà2,4,4,5,5ª1,5ª2,6,8,8ª1,8ª1áâà1
7700000000009310002
8ª1áâà2,8,10,10áâà1,10áâà2,13áâà1,14
7700000000009310003
15áâà1,16,16áâà1,18,20,20áâà1,20áâà2
7700000000009310004
20,22,22,24,26,26,26,28,28áâà1
7700000000009310005
28áâà2,28,28,32,34,36,36áâà1,36,38
7700000000009310006
38áâà1,40,40,40áâà1
7700000000009310007
3áâà1,3áâà3,4áâà1,5áâà1,5áâà2,5áâà3,6
7700000000009320001
7áâà1,7áâà2,7áâà3,8áâà1,8áâà2,8áâà3
7700000000009320002
8áâà4,9áâà1,9áâà2,9áâà3,9áâà4,9áâà5
7700000000009320003
9áâà6
7700000000009320004
1ª1,1ª2,3áâà1,3áâà2,3áâà3,3ª1,3ª2,5ª1
7700000000009330001
5ª2,5ª2áâà1,5ª2áâà2,7ª1,7ª1áâà1,7ª2
7700000000009330002
9ª1,9ª1áâà1,9ª1áâà2,9ª2,9ª2áâà1,9ª3
7700000000009330003
9ª3áâà1,9ª3áâà2,9ª4,9ª5,11áâà1,11ª1
7700000000009330004
13áâà1,13ª1,13ª1áâà3,13ª2,13ª3,15,17
7700000000009330005
4,4áâà2,6ª1,6ª2,6ª2áâà3,7áâà3,7áâà4
7700000000009340001
7áâà5,7áâà6,7ª1,7ª2,8ª1,8ª2,8ª3,10,11
7700000000009340002
11áâà2,11áâà3,11,12,12áâà2,13,14áâà3
7700000000009340003
14ª1,14ª2,14ª3,14ª6,14ª7,14,16ª1,16ª2
7700000000009340004
16ª3,17_21áâà1,17_21áâà2,18,19,20
7700000000009340005
20áâà1,21,21áâà2,21áâà4,21áâà5,21áâà6
7700000000009340006
22,22,22,23,24ª1,24ª2,26,29
7700000000009340007
1,1áâà3,1áâà4,1áâà5,1áâà5,1áâà5
7700000000009350001
121500
1áâà6,1áâà7,1áâà8,1áâà9,1áâà12,1áâà13
7700000000009350002
1áâà13,1áâà14,1áâà15,1áâà16,1áâà17
7700000000009350003
7700000000009350004
7700000000009350005
1áâà29,1áâà30,1áâà31,1áâà32,1áâà33
7700000000009350006
1áâà34,1áâà35,1áâà38,1áâà40,1áâà41
7700000000009350007
1áâà42,1áâà43,1áâà45,1áâà46,1áâà47
7700000000009350008
1áâà48,1áâà49,1áâà51,1áâà52,1áâà53
7700000000009350009
1áâà54,1áâà55,1áâà56,1áâà62,1áâà66
7700000000009350010
1áâà68,1áâà70,1áâà71,1áâà78,1áâà88
7700000000009350011
1áâà91,1áâà92,1áâà94,1áâà100,1áâà105
7700000000009350012
1áâà109,1áâà112,1áâà113,1áâà118
7700000000009350013
1áâà119,1áâà120,1áâà123,1áâà124
7700000000009350014
1áâà125,1áâà127,1áâà128,1áâà129
7700000000009350015
1áâà130,1áâà131,1áâà132,1áâà133
7700000000009350016
1áâà135,1áâà137,1áâà138,1áâà139
7700000000009350017
1áâà140,1áâà141,1áâà142,1áâà147
7700000000009350018
1áâà148,2,3,3áâà1,4,6,6áâà2,8,8,9
7700000000009350019
9áâà2,9áâà4,9áâà6,11,12,13,14,14áâà3
7700000000009350020
14ª2,14,15,16,17,18,19,20áâà1,20áâà2
7700000000009350021
21,23,25,29áâà3,29_,31,33,37,41,43
7700000000009350022
2ª1,2ª2,3,4,4áâà6,5,5áâà3,7,9,13áâà1
7700000000009370001
13áâà2,13áâà5
7700000000009370002
2,3,4áâà2,9áâà1,9áâà2,9áâà4,11áâà1
7700000000009380001
11áâà2,11ª2,12,12áâà2,13áâà1,13áâà2
7700000000009380002
13áâà3,15áâà1,15áâà2
7700000000009380003
3,4áâà1,8
7700000000009390001
1,2ª1,2ª2,3áâà3,3ª1,3ª2,4ª1,4ª2,5ª1
7700000000009400001
5ª2,6,7ª1,7ª2,7ª3,8,9,9áâà1,9áâà2,10
7700000000009400002
11,12ª1,12ª2,12ª3,13ª1,13ª2,13ª3
7700000000009400003
14áâà4,14ª1,14ª2,14ª3,14ª3áâà2,16áâà4
7700000000009400004
16áâà5,16áâà6,16ª2,16ª3,18,18ª2
7700000000009400005
14/11,14,14áâà1,16,16áâà1,20ª1
7700000000009420001
20ª1áâà1,20ª2,20ª2áâà1,22ª1,22ª1áâà2
7700000000009420002
22ª2,22ª2áâà1,24,24ª1,24ª2,24ª2áâà2
7700000000009420003
24ª3,24,24,26,26áâà1,26áâà2,26ª1
7700000000009420004
26ª2,26ª2áâà1,26ª3,26ª3áâà1,26ª3áâà2
7700000000009420005
28,30áâà2,30ª1,30ª2,32,32
7700000000009420006
1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà6
7700000000009420007
7700000000009420008
7700000000009420009
1áâà18,1áâà19,1áâà20,1áâà21,1áâà24
7700000000009420010
7700000000009420011
3áâà9,3áâà10,3áâà11,3áâà12,3áâà13,3ª1
7700000000009420012
3ª1áâà1,3ª2,3ª3,3ª4,3ª5,3ª6,3ª7,3ª8,4
7700000000009420013
7700000000009420014
4áâà6,4áâà7,5ª1,5ª2,5ª3,6áâà1,6áâà2
7700000000009420015
6áâà3,6áâà4,6áâà5,6áâà7,6áâà8,6áâà9
7700000000009420016
6áâà11,6áâà13,6áâà14,6áâà16,6áâà18
7700000000009420017
6áâà19,6áâà20,6áâà24,6áâà26,6áâà27
7700000000009420018
6áâà28,6áâà29,7,8áâà1,8áâà2,8áâà3
7700000000009420019
8áâà4,9,10ª1,10ª1áâà1,10ª1áâà2,10ª2
7700000000009420020
11ª1,11ª2,11ª3,11ª3áâà1,11ª3áâà2,11
7700000000009420021
12áâà1,12ª1,12ª1áâà2,12ª2,12,13ª1
7700000000009420022
13ª2,13ª3,13ª4,13,13,13áâà1,13áâà2
7700000000009420023
13,13,15ª1,15ª2,15ª2áâà1,15ª3,15ª4
7700000000009420024
15ª5,15ª6,15ª6áâà1,15,15áâà1,17ª1
7700000000009420025
17ª2,19ª1,19ª2,19ª2áâà1,21,23ª2,23ª3
7700000000009420026
23áâà1,23áâà2,23áâà3,23áâà4,27ª2
7700000000009420027
27ª2áâà1,27ª2áâà2,27,29,31ª1,31ª2
7700000000009420028
4/12áâà,4/12áâà,4,9áâà1,9áâà2
7700000000009430001
1áâà4,1ª1,1ª1áâà1,1ª2,1ª2áâà1,1ª4,1ª5
7700000000009440001
119501
45268579000
1ª7,1ª7áâà1,1,1,1,2,2áâà1,3ª1
7700000000009440002
3ª1áâà2,3ª2,3ª2,3ª3,3ª4,3ª5,3ª5áâà1
7700000000009440003
3ª6,4ª1,4ª2,4ª2áâà1,5,5ª1,5ª2,5ª3,7ª1
7700000000009440004
7ª2,8,8áâà2,10,10áâà1,10ª1,12ª1,12ª2
7700000000009440005
12_áâà1,12,14ª2,14,16ª1,16ª2,16
7700000000009440006
18,20,20ª2,22,22ª1,22ª2,22ª3,24
7700000000009440007
24áâà1,24áâà2,24,26áâà1,26ª1,26ª2
7700000000009440008
28ª1,28ª2,28ª3,30,30áâà3,30ª1,30ª2
7700000000009440009
30ª3,30ª4,30ª6,32,32ª1,32ª2,32ª3,32ª4
7700000000009440010
34,34ª1,34ª2,34ª3,36ª1,36ª1áâà2,36ª2
7700000000009440011
38ª1,38ª2,38ª2áâà2,40ª1,40ª1áâà1,40ª2
7700000000009440012
40ª2áâà1,40ª3,40ª4,40ª5,40ª6,42ª1,42ª2
7700000000009440013
42ª3,44ª1,44ª3,46,46ª1
7700000000009440014
1áâà1,1áâà2,5,10,20/13,20áâà3,20áâà7
7700000000009450001
21áâà1,21áâà3
7700000000009450002
6,6áâà2,6áâà3,6áâà4,9,9ª1,9ª3,9ª4
7700000000009460001
105318
32áâà6,32áâà7,32áâà7,32áâà8,32ª1,32ª2
7700000000009460002
32ª2,32ª3,32ª4,32ª5,34,34áâà1,34áâà2
7700000000009460003
7700000000009460004
34áâà10,34áâà11,34áâà12,34áâà13
7700000000009460005
34áâà16,34áâà19,34áâà23,34áâà25
7700000000009460006
34áâà26,34áâà29,34áâà30,34áâà31
7700000000009460007
34áâà35,34áâà36,34áâà41,34áâà47
7700000000009460008
34áâà50,34áâà54,34áâà71
7700000000009460009
áâà1,5,5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000009480001
7700000000009480002
5áâà13,5áâà1,5áâà3,5áâà1,5áâà2
7700000000009480003
5áâà4,7,7áâà2,7áâà3,8ª1,8ª1áâà2,8ª4,9
7700000000009480004
10ª1,10ª1áâà1,10ª2,10ª2áâà1,10ª4
7700000000009480005
10ª4áâà2,10ª4áâà3,10ª4áâà4,10ª4áâà5
7700000000009480006
10ª4áâà6,10ª4áâà7,10ª4áâà8,10ª4áâà12
7700000000009480007
11,12,13,15áâà4,15áâà5,15áâà22,17,19
7700000000009480008
21,21áâà2,23,25,27,29,29áâà1,29áâà1
7700000000009480009
29áâà1,29áâà2,29áâà2,29áâà3,29áâà4
7700000000009480010
29áâà5,29áâà6,29áâà8,29áâà8,29áâà8
7700000000009480011
29áâà9,29áâà10,29áâà12,29áâà13,29áâà19
7700000000009480012
29áâà20,29áâà20,29áâà20,29áâà21
7700000000009480013
29áâà21,29áâà22,29áâà26,29áâà26
7700000000009480014
29áâà28,29áâà29,29áâà30,29áâà31
7700000000009480015
29áâà31,29áâà32,29áâà32,29áâà32
7700000000009480016
29áâà32,29áâà33,29áâà34,29áâà34
7700000000009480017
29áâà35,29áâà36,29áâà36,29áâà36
7700000000009480018
29áâà36,29áâà37,29áâà37,29áâà37
7700000000009480019
29áâà38,29áâà42,29áâà43,29áâà44
7700000000009480020
29áâà46,29áâà47,29áâà49,29áâà50
7700000000009480021
29áâà52,29áâà52,29áâà53,29áâà55
7700000000009480022
29áâà55,29áâà58,29áâà59,29áâà70
7700000000009480023
29áâà74,29áâà82,29áâà83,29áâà98
7700000000009480024
29áâà100,29áâà100,29áâà102,29áâà102
7700000000009480025
29áâà103,29áâà103,29áâà105,29áâà106
7700000000009480026
29áâà106,29áâà107,29áâà108,29áâà110
7700000000009480027
29áâà125,29áâà126,29áâà128,29áâà128
7700000000009480028
29áâà130,29áâà133,29áâà134,29áâà135
7700000000009480029
29áâà136,29áâà137,29áâà138,29áâà139
7700000000009480030
29áâà140,29áâà141,29áâà142,29áâà143
7700000000009480031
29áâà146,29áâà147,29áâà148,29áâà149
7700000000009480032
29áâà150,29áâà151,29áâà152,29áâà153
7700000000009480033
29áâà154,29áâà155,29áâà234,29áâà1100
7700000000009480034
29,29áâà1,29áâà2,29áâà3,29áâà4
7700000000009480035
29áâà5,29áâà6,31,33,35,35áâà1,35áâà2
7700000000009480036
7700000000009480037
35áâà8,39,39áâà3,39áâà5,39áâà6,39áâà7
7700000000009480038
39áâà10,39áâà11,39áâà12,39áâà13
7700000000009480039
14,41,41áâà2,41áâà9,41áâà13,41áâà14
7700000000009480041
41áâà22,41áâà27,41áâà64,41áâà64
7700000000009480042
41áâà68,41áâà69,41áâà70,41áâà79
7700000000009480043
41áâà84,41áâà85,41áâà87,41áâà88
7700000000009480044
41áâà91,41áâà96,41áâà98,41áâà100
7700000000009480045
41áâà100,41áâà107,41áâà108
7700000000009480046
5,6,6áâà5,7,8,8áâà2,10,10_,11,11,12
7700000000009490001
13,14,14,15,15,16,16áâà2,17,17áâà2,18
7700000000009490002
1ª1,1ª1áâà1,1ª1áâà2,1ª2,2,4,5,6,7,8
7700000000009500001
129329
8ª1,9,9áâà2,10,10áâà1,11,12ª1,12ª2,13
7700000000009500002
13áâà1,13áâà2,13ª2,14,16,18
7700000000009500003
3,4,5,5áâà1,5áâà2,6,7áâà1,8,10,12,14
7700000000009510001
16,18,20,22,24
7700000000009510002
1,2,2áâà1,2áâà2,3,3áâà2,3áâà3,4,5,6
7700000000009520001
7,7áâà2,7áâà3,7áâà4
7700000000009520002
5,5áâà1,5áâà2,5áâà3,5ª1,7
7700000000009530001
6_áâà7,6,6áâà1,6áâà2,6,8,8áâà1
7700000000009530002
119311
45268584000
9/10
7700000000009530003
11/19,13,13áâà1,15
7700000000009530004
19,21ª1,21ª2,21ª3,21ª3áâà1,25,25ª1
7700000000009530005
119331
8áâà2,8áâà3,8áâà4,8ª1,8ª1áâà1,8ª1áâà2
7700000000009530006
10,12,12áâà1,12áâà2,12áâà3,12áâà4,12ª1
7700000000009530008
12ª1áâà1,12ª3,12ª3áâà1,12ª5
7700000000009530009
25ª1áâà1,27,27áâà1,27ª1,29,29áâà3,29
7700000000009530010
31ª2,31ª3,33,33áâà1,33ª1,33
7700000000009530011
37,37ª1,37ª1,37ª1,37ª2,37ª2áâà1
7700000000009530012
119415
45268581000
37ª2áâà2,37ª3,39,39áâà4,39,39,41áâà1
7700000000009530013
41áâà2,41áâà3,41áâà4,41áâà5,43áâà1
7700000000009530014
43áâà2,45,47,49,51áâà1,51áâà2,51áâà3
7700000000009530015
53,55,57,59,59áâà1,59,61áâà1,63,65,67
7700000000009530016
69,71,73,73áâà1,75,77,79,79áâà1,81,83
7700000000009530017
85,87ª2
7700000000009530019
7700000000009530007
30áâà1,32ª70,32ª71,38,40áâà1,42ª1
7700000000009530020
119454
4,4áâà,4áâà1,4áâà5,4ª1áâà1,4ª1áâà2
7700000000009530021
4ª1áâà3,4ª1áâà4,4ª3áâà1,4ª3áâà2
7700000000009530022
4ª3áâà3,4ª3áâà4,4ª3áâà5,6
7700000000009530023
12,14,14áâà1,14áâà2,14,14,16,16áâà1
7700000000009530024
18,18,20,20,22,24,24,26,28,30
7700000000009530025
42ª1áâà1,42ª1áâà2,42ª2,42ª2áâà1,44,46
7700000000009530026
48,50,50,50áâà1,50áâà2,58,60,60ª1
7700000000009530027
60ª1áâà1,62,62áâà1,62áâà2,64,64,66
7700000000009530028
68,68áâà1,70,70,72,74/50,76ª,76ª
7700000000009530029
76,76áâà1,78áâà,78áâà1,78áâà2
7700000000009530030
7700000000009530031
78áâà8,78áâà9,78áâà10,78áâà11,78áâà12
7700000000009530032
78áâà13,78áâà14,78áâà15
7700000000009530033
7700000000009530018
89,89ª1,89ª2,89ª2áâà2,89ª3,89ª4,89ª5
7700000000009530034
119526
89ª6,91ª1,91ª2,91ª2áâà1,91ª3,93,93áâà1
7700000000009530035
93ª1,93ª1áâà3,93ª2,93ª2áâà1,93ª2áâà2
7700000000009530036
93ª3,93ª3áâà1,95ª1,95ª2,95ª2áâà1,95ª3
7700000000009530037
95ª3áâà1,95ª4,97,97áâà1,97áâà3,97ª1
7700000000009530038
97ª2,97ª3,99ª1,99ª1áâà2,99ª1áâà3,99ª2
7700000000009530039
99ª3,99ª3áâà1,101áâà2,101ª1,101ª2
7700000000009530040
101ª3,101ª3áâà1,101ª3áâà2,101ª3áâà3
7700000000009530041
101ª3áâà4,101ª4,101ª5,101ª5áâà1
7700000000009530042
101ª5áâà2,101ª6,101ª8,101ª8áâà1
7700000000009530043
101ª8áâà2,101,103,103ª1,103ª3,103ª4
7700000000009530044
103ª5,103ª5áâà2,105,105ª1,105ª2
7700000000009530045
105ª2áâà1,105ª3,105ª3áâà1,105ª4
7700000000009530046
105ª4áâà1,105ª4áâà2,105ª4áâà3
7700000000009530047
105ª4áâà4,105
7700000000009530048
76ª,76ª,76ª,76ª,76ª,76ª,76ª
7700000000009530049
6_,6_áâà1,6_áâà2,6_áâà3,6_áâà5
7700000000009530050
76áâà1,76áâà2,76ªáâà2,76áâà3,76áâà4
7700000000009530051
82áâà1,82áâà2,82áâà3,82áâà4,86,86áâà1
7700000000009530052
100áâà,100áâà,100,102,109,111
7700000000009530053
111áâà1,113,115,117,117,119,121,121ª1
7700000000009530054
123,123áâà2,123áâà3,125,125áâà7,125ª1
7700000000009530055
125ª1áâà1,125,127,127ª2,127ª3
7700000000009530056
86áâà1,86áâà2,86áâà3,86áâà4,86áâà5
7700000000009530057
86áâà6,86áâà7,86áâà8,86ª2,86_,86
7700000000009530058
86áâà1,86,88,88áâà1,88áâà2,88ª1,88ª2
7700000000009530059
88ª3,88ª3áâà1,90áâà1,90áâà2,90áâà3
7700000000009530060
90áâà4,90áâà5,90áâà6,92,92áâà,92áâà1
7700000000009530061
92áâà2,92ª1,92ª1áâà1,94áâà1,94ª1,94ª2
7700000000009530062
94ª3,94ª4,94ª5,96ª1,96ª1áâà1,96ª2
7700000000009530063
96ª2áâà1,96ª2áâà2,96ª3,96ª4,98,98áâà1
7700000000009530064
84ª3,84ª3áâà1,84ª3áâà2
7700000000009530065
119606
1áâà1,1áâà2,3,5
7700000000009530069
84áâà1,84áâà2,84áâà3,84áâà4,84ª1,84ª2
7700000000009530070
1,3,3ª1,3ª2,6,6áâà2,10,14,14áâà2,18
7700000000009550001
7700000000009550002
34áâà6,34áâà7,34áâà8,34áâà9,34áâà10
7700000000009550003
34áâà11,34áâà12,34áâà13,34áâà14
7700000000009550004
34áâà15,34áâà16,34áâà17,34áâà18
7700000000009550005
34áâà19,34áâà20,34áâà21,34áâà22
7700000000009550006
2,4,6ª1,6ª1áâà1,8,8áâà2,9,10,11,12,14
7700000000009560001
16,18ª1,18ª2
7700000000009560002
3,3ª2,3ª2áâà4,4ª1,4ª2,4ª2áâà3,5,6,7
7700000000009570001
8ª1,8ª2,9,10
7700000000009570002
2áâà1,2áâà1,2áâà2,2áâà2,2áâà3,2áâà4
7700000000009590001
2áâà4,2áâà5,2áâà5,2áâà6,2áâà7,2áâà8
7700000000009590002
7700000000009590003
2áâà14,2áâà15,2áâà15,2áâà16,2áâà17
7700000000009590004
7700000000009590005
2áâà23,2áâà1,2áâà2,2áâà3,2áâà4
7700000000009590006
2áâà5,2áâà6,2áâà7,2áâà8,2áâà9
7700000000009590007
2áâà10,2áâà11,2áâà12,2áâà13
7700000000009590008
2áâà14,2áâà15,2áâà16,2,2áâà1
7700000000009590009
2áâà2,2áâà1,2áâà2,2áâà1,2áâà2
7700000000009590010
2áâà3,2áâà4,2áâà1,2áâà2,4,4áâà2,7
7700000000009590011
7700000000009620001
129337
7700000000009620002
10áâà11,12,12áâà2,12áâà3,14,14áâà2
7700000000009620003
14áâà3,14áâà4,14áâà5,34
7700000000009620004
2,2áâà1,2áâà3,2ª1,2ª2,2ª2áâà3,2ª2áâà4
7700000000009620005
129338
2ª3,2ª4,2ª5,2ª6,2,2,2,2áâà1,2áâà3
7700000000009620006
2áâà3,2áâà4,2áâà5,2áâà6,2áâà7
7700000000009620007
4áâà1,4áâà2,4áâà3,4áâà4,4áâà117
7700000000009620008
4áâà196,4ª1,4ª2,4ª2áâà1,6ª1,6ª2,6ª4
7700000000009620009
8ª1,8ª1áâà1,8ª1áâà2,8ª2,8ª3,8ª3áâà1
7700000000009620010
8ª5áâà1,8ª5áâà2,8ª5áâà3,8ª5áâà4
7700000000009620011
8ª5áâà5,8ª5áâà6,8ª5áâà7,8ª5áâà8,8áâà1
7700000000009620012
8áâà2,8áâà8,8áâà9,8áâà10,8áâà11
7700000000009620013
8áâà13
7700000000009620014
1,2,3,4áâà1,5,6áâà1,8,10áâà1,12,14
7700000000009630001
14áâà1,14áâà2,17,19,21,22,23,24,25/8
7700000000009630002
26,27,28,33,34,36,38
7700000000009630003
2/1,3,4ª1,4ª1áâà1,4ª1áâà2,5áâà1,7ª1
7700000000009640001
7ª2,7ª3,7ª4,7ª5,7ª6,7ª7,7ª8,7ª9,7ª10
7700000000009640002
7ª11,7ª12,7ª13,7ª15,7ª16,7ª17,7ª18
7700000000009640003
7ª22,7ª30,7ª31,8,10,10áâà2,10áâà3
7700000000009640004
7700000000009640005
10áâà10,10áâà16,11áâà1,11áâà2,11áâà3
7700000000009640006
7700000000009640007
7700000000009640008
11áâà14,11áâà15,11áâà16,11áâà17
7700000000009640009
11áâà18,11áâà20,11áâà21,11áâà22
7700000000009640010
7700000000009640011
11áâà36,11áâà37,11áâà38,11áâà45
7700000000009640012
11áâà47,11áâà50,11áâà51,12,12/1,14
7700000000009640013
7700000000009640014
16áâà6,16áâà7,16áâà8,16áâà9,16áâà17
7700000000009640015
18áâà1,18áâà2,18áâà3
7700000000009640016
áâà1,áâà2,1,1áâà1,1ª1,1ª1áâà1,2áâà3
7700000000009650001
125480
45283573000
2áâà4,2áâà5,2áâà6,2ª1,2ª2,3ª1,4,4áâà2
7700000000009650002
4áâà3,4áâà4,4áâà5,4,5ª1,5ª1áâà1
7700000000009650003
5ª1áâà2,6ª1,6ª2,6ª2áâà2,6ª2áâà3,7ª1
7700000000009650004
7ª1áâà1,7ª2,7ª4,7ª4áâà1,8,8ª1,8ª1áâà1
7700000000009650005
9ª1,9ª2,9ª2áâà1,9ª3,11ª1,11ª2,11ª3
7700000000009650006
11ª3áâà4,11ª4,11ª4áâà1,13ª1,13ª2áâà1
7700000000009650007
13ª2áâà2,14,15,15ª1áâà1,15ª1áâà2,16
7700000000009650008
17áâà1,17ª1,17ª1áâà1,17ª2,18,18ª3,19ª1
7700000000009650009
19ª3,20,21,21ª1,21ª1áâà2,21ª2,21ª3
7700000000009650010
21ª4,21ª4áâà1,23ª1,23ª1áâà2,23ª2
7700000000009650011
23ª2áâà1,23ª2áâà2,23ª3,23ª4,23ª4áâà1
7700000000009650012
23ª4áâà2,25,25áâà2,25ª1,25ª2,26,26áâà1
7700000000009650013
27,27áâà1,27ª1,27ª2,27ª3,27ª3áâà1
7700000000009650014
27ª3áâà2,28áâà1,29,29áâà2,29ª1
7700000000009650015
29ª1áâà1,29ª1áâà2,29ª1áâà3,29ª1áâà4
7700000000009650016
30áâà1,30áâà2,30áâà3,30áâà4,30áâà7
7700000000009650017
30áâà8,30áâà9,31ª1,31ª2,31ª3,33ª1
7700000000009650018
36áâà2,36áâà3,36áâà4,36áâà5,36áâà6
7700000000009650020
36áâà7,36áâà8,36áâà9,36áâà10,36áâà28
7700000000009650021
37ª1,37ª2,39,39áâà1,41,42,43ª1
7700000000009650022
7700000000009660001
129226
7700000000009660002
3áâà6,3áâà7,3áâà8,3áâà10,3áâà11,4áâà1
7700000000009660003
4áâà2,4áâà3,4áâà4,4áâà6,4áâà7,4áâà8
7700000000009660004
7700000000009660005
4áâà16,4áâà17,4,4áâà2,5,9,9
7700000000009660006
1,3ª1,3ª1áâà1,3ª1áâà2,3ª2,3,4,4áâà1
7700000000009670001
117574
4áâà2,4,5,6,6áâà1,6ª1,6ª2,7ª2,7ª2áâà1
7700000000009670002
7ª2áâà2,7ª2áâà3,7ª3,7ª4,8ª2,8ª2áâà1
7700000000009670003
8ª2áâà2,8ª2áâà3,8ª3,12,12áâà1,13,13ª2
7700000000009670004
14,15,17,17áâà1
7700000000009670005
1áâà1,1áâà2,1áâà1,1áâà2,1áâà3
7700000000009680001
127081
1áâà4,1áâà5,1áâà6,1áâà7,1áâà8
7700000000009680002
1áâà9,1áâà12,1áâà13,1áâà17,2áâà1
7700000000009680003
2áâà2,2áâà3,2áâà4,2,3áâà1,3áâà2,3áâà3
7700000000009680004
3áâà4,3áâà5,3áâà6,3áâà7,3áâà8,3áâà9
7700000000009680005
3áâà10,3áâà11,3áâà13,3áâà14,4áâà1
7700000000009680006
4áâà2,4áâà3,4áâà13,4áâà15,4áâà17
7700000000009680007
4áâà19,4áâà21,4ª1,4ª2,4ª3,4ª4,4ª5,4ª6
7700000000009680008
4ª10,4ª11,5áâà1,6áâà1,6áâà2,6áâà3
7700000000009680009
6áâà5,6áâà6,6áâà7,11áâà1,11áâà2,11áâà3
7700000000009680010
7700000000009680011
11áâà9,11áâà10,11áâà11
7700000000009680012
1,3,3áâà1,4,4áâà3,5,5áâà1,5áâà2,5,6
7700000000009690001
119192
6áâà1,7,8,8áâà1,8áâà2,8áâà3,8áâà5
7700000000009690002
8áâà6,8áâà7,8áâà8,8áâà9,9,9ª1,9ª1áâà1
7700000000009690003
11,11áâà1,11áâà2,11áâà4,11ª1,13,14
7700000000009690004
14áâà29,15,15áâà3,15ª1,15ª2,15ª2áâà1
7700000000009690005
15ª2áâà2,15,16áâà3,17,17ª1,17,19,21
7700000000009690006
21áâà1,23,27,27áâà2,27áâà3,27áâà4
7700000000009690007
27áâà5,27áâà6,27áâà7,27áâà8,27áâà9
7700000000009690008
27áâà9,27áâà9,27áâà10,27áâà11
7700000000009690009
27áâà12,27áâà13,27áâà14,27áâà15
7700000000009690010
27áâà16,27áâà19,27áâà20,27áâà21
7700000000009690011
3ª1,3ª1áâà1,4ª1,4ª2,4ª3,4,4áâà1
7700000000009700001
4áâà2,4áâà3,6,6áâà1,7,7áâà2,7,8
7700000000009700002
10ª1,10ª2,10ª2áâà1,12
7700000000009700003
10ª1,10ª2,11ª1,11ª2,11ª3,11ª4,12áâà1
7700000000009710001
117447
12ª1,12ª2,12ª3,12ª4,12ª4áâà1,12ª4áâà2
7700000000009710002
12ª5,12ª5áâà1,13ª1,13,14,14áâà1,15ª1
7700000000009710003
15ª2,16
7700000000009710004
17ª1,17ª2,17ª3,17ª4,18/15ª1,19,20
7700000000009710005
45293570000
20áâà1,20,20áâà1,20áâà2,20áâà3
7700000000009710006
20áâà4,20áâà5,22,22ª2,24ª1,24ª2,24ª3
7700000000009710007
24ª4,26ª1,26ª2,28ª1,28ª2,28ª3,28ª3áâà1
7700000000009710008
7700000000009710009
2,2áâà1,2áâà2,3,3áâà1,3áâà3,3,3,4ª1
7700000000009710010
117449
4ª2,4ª3,5/6ª1,5/6ª2,5/6ª3,6,6áâà1
7700000000009710011
6áâà2,7/5ª1,7/5ª2,7/5ª3,9
7700000000009710012
1,2áâà1,3,4,7,8,9,11,11áâà6,12,12áâà3
7700000000009720001
4,6,6áâà3,8ª1,8ª2,10ª1,10ª1áâà3,12
7700000000009730001
9áâà38,9áâà39
7700000000009730002
121354
3ª1,3ª1áâà3,3ª1áâà4,3ª1,3,5,7áâà1,9
7700000000009730003
7700000000009730004
9áâà9,9áâà11,9áâà12,9áâà13,9áâà14
7700000000009730005
9áâà15,9áâà16,9áâà18,9áâà22,9áâà23
7700000000009730006
9áâà26,9áâà27,9áâà28,9áâà29,9áâà32
7700000000009730007
2áâà1,2/14,3,3áâà2,4,5,6/13áâà1
7700000000009740001
125362
6/13áâà2,6/13áâà3,7,7áâà1,7áâà1,7áâà2
7700000000009740002
7áâà3,7áâà4,7áâà5,7áâà7,7áâà8,7áâà10
7700000000009740003
7áâà12,7áâà13,7áâà14,7áâà17,7áâà18
7700000000009740004
7áâà19,7áâà20,7áâà21,7áâà22,7áâà23
7700000000009740005
7áâà24,7áâà25,7áâà26,7áâà27,7áâà28
7700000000009740006
7áâà29,7áâà30,7áâà32,7áâà33,7áâà35
7700000000009740007
7áâà36,7áâà37,7áâà38,7áâà39,7áâà40
7700000000009740008
7áâà41,7áâà42,7áâà43,7áâà48,7áâà52
7700000000009740009
7áâà55,7áâà56,7áâà59,7áâà61,7áâà62
7700000000009740010
7áâà64,7áâà69,7áâà70,7áâà71,7áâà72
7700000000009740011
7áâà73,7áâà74,7áâà75,7áâà76,7áâà77
7700000000009740012
7áâà78,7áâà79,7áâà80,7áâà81,7áâà82
7700000000009740013
7áâà83,7áâà85,7áâà86,7áâà87,7áâà91
7700000000009740014
7áâà93,7áâà94,7áâà97,7áâà98,7áâà99
7700000000009740015
7áâà102,7áâà104,7áâà106,7áâà106
7700000000009740016
7áâà128,7áâà129,7áâà227,7áâà243,8/16
7700000000009740017
9ª1,10,11,12,12áâà1,12áâà3,13,13áâà6
7700000000009740018
13ª1áâà1,13ª1áâà4,13áâà1,14,14/11,18
7700000000009740019
20ª1,20ª2,20ª2áâà1,20ª2áâà2,20ª2áâà4
7700000000009740020
2,2/36áâà1,4,6,13áâà1,15áâà1,15áâà3
7700000000009770001
15áâà7
7700000000009770002
10áâà1,10áâà2,12áâà1,12,12áâà13,23
7700000000009770003
119017
23áâà2,23_25,27
7700000000009770004
2áâà1,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000009780001
4áâà7,4áâà8,6,6áâà1,6áâà2,8,8ª1,10
7700000000009780002
1,3,5ª1,5ª2,7ª1,7ª2,7ª3,9ª1,9ª2
7700000000009780003
45293590000
9ª2áâà2,9ª3,11ª1,11ª2,11ª3,11ª4,13ª1
7700000000009780004
7700000000009780005
13ª2,13ª3,13ª4,15ª1,15ª3,17,17ª1
7700000000009780006
17ª1áâà1,17ª1áâà2,17ª2,19áâà1,19áâà2
7700000000009780007
19áâà3,19áâà4,19ª2,19ª3,19ª3áâà1,19ª4
7700000000009780008
19ª5,19,21ª1,21ª2,21ª3,23ª1,23ª2,25ª1
7700000000009780009
18,20,20áâà1,22,31,31áâà1,31,33,33ª1
7700000000009780010
117393
45293578000
33ª2,33ª3,35ª1,37ª1,37ª2,37ª3,37ª4,39
7700000000009780011
39áâà1,41,41áâà1,41áâà2,41áâà3,43,45
7700000000009780012
25ª2,25ª2áâà1,27,27áâà1
7700000000009780013
45,47,49,49,51,51áâà2,53,53,55
7700000000009780014
8áâà1,8áâà2,9,10,11,12,14áâà1,14áâà2
7700000000009790001
2/2
7700000000009790002
2áâà1,2,2áâà1,2áâà3,2áâà4,2áâà5
7700000000009800001
3/6,4áâà1,4áâà1,4áâà4,5/3áâà1,6áâà1
7700000000009800002
7/4,8/8,9/3áâà1,10/7áâà1,11áâà1,12áâà1
7700000000009800003
13,14/5,15,16/2áâà1,17,20,22áâà1,24,26
7700000000009800004
28,30,32,34áâà1,36,38
7700000000009800005
1,2,4,9áâà1,10áâà1
7700000000009810001
1,2áâà1,7áâà1,8áâà1,9áâà1,11
7700000000009820001
1/18,3,4,5,6,7
7700000000009830001
3áâà1,4,5,6áâà1
7700000000009840001
1,2,2áâà1,2áâà1,2áâà2,2áâà3,2áâà4
7700000000009850001
7700000000009850002
2áâà10,2,2áâà2,2áâà3,2áâà4,2áâà1
7700000000009850003
2áâà2,3,4,5,6,7,8,9,14,15,16,17,18
7700000000009850004
19/8,20/10,22/13,23,24,25,25ª1,26,27
7700000000009850005
28/12,32,32ª1,33,35,37,38,40,41,42,47
7700000000009850006
7700000000009860001
7700000000009860002
8áâà13,8áâà14,8áâà15
7700000000009860003
1,2,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000009870001
2áâà6,2áâà8,2áâà12,2áâà14,2áâà15
7700000000009870002
2áâà16,2áâà17,3,5,7,9,10,11,11áâà1
7700000000009870003
16ª1áâà1,18,20
7700000000009870004
1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2
7700000000009880001
2áâà2,13,15,17_19
7700000000009900001
3áâà5,3/5áâà1,3/5áâà2,3/5áâà3,3/5áâà4
7700000000009920001
3/5áâà5,3/5áâà6,3/5áâà7,3/5áâà8
7700000000009920003
3/5áâà9,5/25áâà1,5/25áâà17,5/25áâà18
7700000000009920004
5/25áâà19,7/6áâà1,7/6áâà2,7/6áâà6,9
7700000000009920005
9/11,11áâà1,11áâà3
7700000000009920006
7700000000009920002
4/7áâà1,4/7áâà2,8/1áâà1,10,10áâà1,12
7700000000009920007
14áâà1,14áâà2,14áâà3,14áâà4,16áâà1
7700000000009920008
16áâà2,16áâà2,18/9,20áâà2,20/6áâà1
7700000000009920009
3,4áâà1,4ª1,4ª2,6áâà2,6ª1,6ª2,10,12
7700000000009940001
12,14,14ª2,14,16ª1,16ª2,16ª3,16
7700000000009940002
1,1áâà2,2/11,3,5,7ª1,7ª2,8,8áâà3
7700000000009950001
3,4,5,6,6ª2,6,6áâà1,8,9,10
7700000000009960001
2,2áâà2,4,4áâà2,6,8,8ª1,10,10,12
7700000000009970001
12áâà2,12áâà3,12áâà4,14,14,16,16ª2,18
7700000000009970002
18áâà1,20,20áâà2,20áâà3,24,28
7700000000009970003
2áâà1,2áâà4,2áâà5,2áâà7,2áâà8,5,5áâà2
7700000000009970004
7700000000009970005
7700000000009970006
5áâà14,5áâà15,5áâà16,5áâà17,5áâà18
7700000000009970007
5áâà19,5áâà20,5áâà21,5áâà23,5áâà24
7700000000009970008
7700000000009970009
5áâà31,5áâà32,5áâà34,5áâà35,5áâà36
7700000000009970010
5áâà38,5áâà39,5áâà42,5áâà43,5áâà44
7700000000009970011
2áâà1,2áâà2
7700000000009980001
3,3ª1
7700000000009990001
4,5,6ª1,6ª2,7áâà1,7áâà2,7ª1,7ª2,8ª1
7700000000009990002
8ª2,9,10,10áâà2,10áâà3
7700000000009990003
12,12áâà1,12áâà2,12áâà3,12áâà6,12áâà7
7700000000010000001
12áâà9,12áâà11,12ª1,12ª2,14,14áâà2
7700000000010000002
14ª1,14ª2,14ª3,14,21,23ª1,25ª1,25ª2
7700000000010000003
29áâà1,29ª1,29ª1áâà1,29ª2,31ª1,31ª2
7700000000010000004
31ª3,33,33áâà1,33áâà2,33áâà3,33áâà4
7700000000010000005
33áâà5,33áâà6,33,35,35áâà1,37,37
7700000000010000006
37áâà1,37áâà2,39,39áâà1,41
7700000000010000007
1,1áâà1,2ª1,2ª1áâà1,2ª2,2ª2áâà1,2
7700000000010000008
2áâà1,2áâà2,3,5,5áâà2,5,7,9ª1,9ª2
7700000000010000009
11,13,15ª1,15ª2,15ª2áâà1,15ª3,15ª3áâà2
7700000000010000010
7700000000010000011
2ª,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000010000012
2áâà6,2áâà1,2áâà2,2áâà1,4,6,6áâà1
7700000000010000013
6áâà2,6áâà3,6áâà5,6áâà6,6áâà7
7700000000010000014
6ª5,6ª6,8,8áâà1,8ª1,8ª2,8áâà1
7700000000010000015
1áâà2,2/6áâà2,4,5,7_9áâà1,7_9áâà2
7700000000010010001
7_9áâà3,7_9áâà5,7_9áâà7,7_9áâà12,9áâà1
7700000000010010002
10,13áâà1,13áâà3,13áâà4,13áâà5,13áâà6
7700000000010010003
15áâà1,15áâà2,15áâà3,17,19áâà1,19áâà2
7700000000010010004
3,3áâà3,3áâà5,6
7700000000010020001
7700000000010020005
14,16,16áâà2,16áâà3,16áâà4,16áâà5,18
7700000000010020002
18,20,22áâà1,22áâà2,22áâà3,24,24áâà1
7700000000010020003
7700000000010020004
24áâà7,25/2,26,26,27,29,29áâà1,29ª1
7700000000010020006
29ª1áâà1,31,31áâà1,31áâà3,31áâà4
7700000000010020007
31áâà5,31áâà6,31áâà7,31áâà8,31ª1
7700000000010020008
31ª1áâà2,33
7700000000010020009
2,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6,2áâà1
7700000000010020010
4áâà2,4áâà3,4áâà4,4áâà5,4áâà6
7700000000010020011
4áâà7,4áâà8,4áâà9,4áâà10,4áâà11
7700000000010020012
4áâà12,4áâà13,4áâà14,4áâà17
7700000000010020013
4áâà18,4áâà19,4áâà20,4áâà21
7700000000010020014
4áâà22,4áâà23,4áâà24,4áâà25
7700000000010020015
4áâà26,4áâà27,4áâà28,4áâà29
7700000000010020016
4áâà30,4áâà31,4áâà32,4áâà33
7700000000010020017
4áâà34,4áâà35,4áâà36,4áâà38
7700000000010020018
4áâà39,4áâà40,4áâà41,4áâà42
7700000000010020019
4áâà43,4áâà44,4áâà45,4áâà46
7700000000010020020
4áâà47,4áâà48,4áâà49,4áâà50
7700000000010020021
4áâà51,5áâà3,5ª1,5ª1áâà23,5ª2,5
7700000000010020022
5áâà1,5áâà2,6,6áâà2,6áâà3,6áâà4
7700000000010020023
6áâà6,7,7áâà2,9/2,10áâà1,10áâà2,10áâà4
7700000000010020024
10áâà5,10áâà6,10áâà7,10áâà8,10áâà9,11
7700000000010020025
11áâà1,11áâà4,12,12áâà1,12áâà1,12áâà2
7700000000010020026
12áâà3,12áâà6,12áâà7,13ª1,13ª2,15ª1
7700000000010020027
15ª2,15ª3,17áâà2,17ª1,17ª2,17ª2áâà1
7700000000010020028
17ª2áâà2,19,21ª1,21ª2,23,23áâà1
7700000000010020029
7700000000010030001
2,4,5,6ª1,6ª2,7ª1,7ª2,7ª3,7ª4,8ª1
7700000000010050001
8ª1áâà1,8ª2,9ª1,9ª2,10,10áâà1,10áâà2
7700000000010050002
7700000000010050003
10áâà8,10áâà9,10áâà12,10áâà15,10áâà16
7700000000010050004
10áâà17,10áâà18,10áâà19,10áâà20
7700000000010050005
10áâà21,10áâà28,10áâà31,10áâà32
7700000000010050006
10áâà33,11ª1,11ª2,11ª3,13,13áâà1,15/16
7700000000010050007
2,4,6ª1,6ª2,8ª1,8ª2,10ª1,10ª2,12ª1
7700000000010060001
12ª2,14ª1,14ª1áâà1,14ª3
7700000000010060002
1,5,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000010070001
7700000000010070002
6áâà12,6áâà13,6áâà14,6áâà15,6áâà17
7700000000010070003
6áâà18,6áâà19,6áâà20,6áâà21,6áâà22
7700000000010070004
6áâà23,6áâà24,6áâà25,10,12,12ª1
7700000000010070005
12ª1áâà1,16,23áâà9,26
7700000000010070006
1,1,3ª1,4ª1,4ª2,4ª3,5ª1,5ª3,6ª1,6ª2
7700000000010080001
125424
2áâà1,8áâà1,14áâà1
7700000000010090007
84áâà8
7700000000010090008
125310
45283555000
139áâà1,139áâà2,142,142áâà1,142áâà2
7700000000010090001
45283559000
142áâà3,142áâà4,142áâà5,142áâà7
7700000000010090002
142áâà9,146,146áâà2,146áâà3,146áâà4
7700000000010090003
146áâà6,146áâà7,146áâà8,146áâà10
7700000000010090004
146áâà12,146áâà13,146áâà14,146áâà16,154
7700000000010090005
áâà4,41ª1,43áâà1,45,47áâà2,47áâà5
7700000000010090006
47áâà6,47áâà7,47áâà8,47áâà9,47áâà11
7700000000010090010
47áâà12,47áâà19,49,49áâà2,52áâà1
7700000000010090011
52áâà6,52áâà7,52áâà8,52áâà11,52áâà12
7700000000010090012
52áâà14,52ª1,52ª1áâà1,54ª1,56ª1
7700000000010090013
56ª1áâà2,58ª1,60áâà1,60ª1,60ª1áâà1
7700000000010090014
60ª2,62,62áâà1,62áâà2,63,63áâà1,63áâà2
7700000000010090015
63áâà3,63áâà4,63áâà5,63áâà6,63áâà7
7700000000010090016
63áâà8,63áâà10,63áâà11,63áâà12,63áâà13
7700000000010090017
63áâà15,63áâà16,63áâà17,63áâà1,65ª1
7700000000010090018
65ª2,65ª2áâà1,65ª2áâà2,65ª2áâà3
7700000000010090019
65ª2áâà4,65ª2áâà5,65ª2áâà6,65ª2áâà7
7700000000010090020
65ª2áâà8,65ª2áâà9,65ª2áâà10,65ª2áâà11
7700000000010090021
65ª2áâà12,65ª2áâà13,65ª2áâà14
7700000000010090022
65ª2áâà15,65ª2áâà16,65,65áâà1
7700000000010090023
65áâà2,65áâà3,65áâà5,65áâà7
7700000000010090024
65áâà8,65áâà12,67,67áâà1,67áâà2
7700000000010090025
67áâà3,67áâà5,67áâà6,67áâà7,71,73
7700000000010090026
73ª1áâà2,75,75áâà1,75áâà2,75ª1
7700000000010090027
75ª1áâà2,75ª1áâà3,77ª1,77ª1áâà1
7700000000010090028
77ª1áâà2,77ª1áâà3,77ª1áâà4,77ª1áâà5
7700000000010090029
77ª2,79,79áâà1,80áâà1,80áâà2,80áâà3
7700000000010090030
80áâà4,80áâà5,80áâà6,80áâà7,80áâà12
7700000000010090031
80ª1,80ª2,80ª3áâà1,80,80áâà1,81ª2
7700000000010090032
81ª2áâà2,81ª2áâà3,81ª2áâà4,81ª2áâà5
7700000000010090033
81ª2áâà6,81ª2áâà7,81ª2áâà8,81ª2áâà9
7700000000010090034
81ª2áâà10,81ª2áâà11,81ª2áâà12
7700000000010090035
81ª2áâà13,81ª3,81ª4,81ª4áâà1,81ª4áâà2
7700000000010090036
82áâà1,82áâà2,82áâà4,83,83áâà3,83ª1
7700000000010090037
83ª2,83ª2áâà3,83ª2áâà4,83ª2áâà5
7700000000010090038
83ª2áâà6,83ª2áâà7,83ª2áâà8,83ª2áâà9
7700000000010090039
83ª2áâà14,83ª2áâà16,83ª3,83ª4,84
7700000000010090040
84áâà1,84áâà4,84áâà4,84áâà4,84áâà6
7700000000010090041
84áâà11,84áâà12,84áâà13,84áâà14
7700000000010090042
84áâà15,84áâà16,84áâà17,84áâà18
7700000000010090043
84áâà21,84áâà23,84áâà35,84áâà36
7700000000010090044
84áâà38,84ª3,84ª7,84ª9,86,87áâà1
7700000000010090045
87áâà3,87ª1áâà1,87ª1áâà2,87ª1áâà3
7700000000010090046
87ª1áâà5,87ª1áâà6,87ª1áâà11,87ª1áâà12
7700000000010090047
87ª1áâà13,87ª2áâà1,87ª3,87ª3áâà1,88
7700000000010090048
88áâà3,88áâà4,88áâà4,88áâà5,88áâà7
7700000000010090049
88áâà8,88áâà9,88ª2,88ª3áâà3,88ª5áâà5
7700000000010090050
88ª5áâà18,88ª6,88ª6áâà1,88ª9áâà1
7700000000010090051
88ª9áâà2,88ª9áâà3,88áâà1,89ª1
7700000000010090052
89ª1áâà1,89ª1áâà2,90áâà1,90áâà2,90áâà3
7700000000010090053
90áâà4,90áâà5,90áâà6,90áâà7,90áâà8
7700000000010090054
90áâà9,90áâà10,90áâà11,90áâà12,90áâà13
7700000000010090055
90áâà14,90áâà15,90áâà16,90áâà17
7700000000010090056
90áâà18,90áâà19,90áâà20,90áâà22
7700000000010090057
90áâà23,90áâà24,90áâà26,90áâà27
7700000000010090058
90áâà28,90ª2,91,91áâà2,92,92áâà1,92ª1
7700000000010090059
92ª2,92ª2áâà3,92ª3,93,93áâà1,93áâà2
7700000000010090060
93,94,94áâà1,95,95áâà1,95áâà2,95áâà3
7700000000010090061
95áâà4,95áâà5,95áâà6,95áâà7,95áâà8
7700000000010090062
95áâà9,95ª2,95ª3,95ª4,95ª5,95ª6,96ª2
7700000000010090063
96/2,97,97áâà24,97,98,100,100ª1
7700000000010090064
100ª1áâà1,101,101áâà1,102,102áâà2
7700000000010090065
102ª1,103,104,106,108,108áâà1,108áâà3
7700000000010090066
110,112,112áâà1,112áâà2,112áâà3
7700000000010090067
112áâà4,112áâà5,112áâà6,112áâà7
7700000000010090068
112áâà8,112áâà9,112áâà10,112áâà12
7700000000010090069
112áâà18,112ª1áâà1,112ª1áâà2,112ª1áâà3
7700000000010090070
112ª1áâà5,112ª1áâà6,112ª2,112ª3
7700000000010090071
112ª3áâà2,112ª4,112ª5,114ª1,114ª1áâà2
7700000000010090072
114ª2áâà1,114ª2áâà2,114ª2áâà3
7700000000010090073
114ª2áâà4,116,116áâà1,116áâà2,116áâà4
7700000000010090074
116áâà5,116áâà7,116áâà9,116áâà10
7700000000010090075
116áâà11,116áâà17,116áâà18,116áâà25
7700000000010090076
116áâà1,120,122,126,128,128áâà2
7700000000010090077
128áâà3,128áâà4,128áâà5,128áâà6,130,132
7700000000010090078
26áâà2,26áâà3
7700000000010090009
22,22ª2,26,26áâà1,26áâà1,28,28áâà1
7700000000010090080
28áâà2,28áâà3,28áâà4,28áâà5,30áâà1
7700000000010090081
30áâà2,30áâà3,30ª1,30áâà1,32,34
7700000000010090082
34áâà1,34áâà2
7700000000010090083
1ª,1ª,1,1áâà1,2,2áâà2,3,3áâà2,3áâà3
7700000000010090084
3áâà4,4,4áâà25,4áâà27,4áâà34,4áâà36
7700000000010090085
4áâà39,4áâà43,4áâà47,4áâà50,4áâà51
7700000000010090086
4áâà53,4áâà59,4áâà60,4áâà61,4áâà64
7700000000010090087
4áâà65,4áâà70,4áâà77,4áâà79,4áâà80
7700000000010090088
4áâà81,4áâà82,4áâà83,4áâà84,4áâà85
7700000000010090089
4áâà98,4áâà99,4áâà104,4áâà114,4ª1,4ª2
7700000000010090090
4ª3,4ª4,4ª5,4ª6,4ª7,4ª8,4ª9,4ª10,4ª11
7700000000010090091
4ª12,4ª14,4ª15,4ª16,4ª17,4ª18,4ª19
7700000000010090092
4ª20,4ª21,4ª22,4ª23,4ª24,4ª24,4ª24
7700000000010090093
4ª26,4ª29,4ª30,4ª31,4ª35,4ª38,4ª57
7700000000010090094
4ª58,4ª66,5áâà1,5áâà2,6,6áâà2,6áâà7,7
7700000000010090095
7,7,8,9áâà1,9áâà2,9áâà8,9áâà9,9áâà1
7700000000010090096
10,11áâà1,11áâà2,11áâà3,11áâà4,11áâà6
7700000000010090097
11áâà7,11áâà8,11áâà11,12,12áâà2,13
7700000000010090098
13áâà1,14,14,14,14áâà5,15/22
7700000000010090099
15/22áâà2,16,16ª2,16ª3,18,20/2
7700000000010090100
52áâà1,60áâà2
7700000000010090101
93ª1,95áâà12,124,128áâà1
7700000000010090102
125371
67áâà8,77,77áâà1,86áâà1
7700000000010090103
2,2áâà2,3,11áâà1,11áâà2,16/20áâà1
7700000000010100001
16/20áâà3,16/20áâà4,16/20áâà5
7700000000010100002
16/20áâà6,16/20áâà7,21/23,21/5áâà1
7700000000010100003
23/3áâà2,25,27áâà1
7700000000010100004
5/6áâà4,5/6áâà7,5/6áâà8,5/6áâà9,6
7700000000010110001
6áâà2,6áâà5,6áâà6,6áâà7,7/6,8áâà3
7700000000010110002
8áâà5,8áâà6,8áâà7,8áâà9,8áâà10,8áâà11
7700000000010110003
9áâà1,9áâà2,9áâà4,10,11áâà5,11áâà6,11
7700000000010110004
12,12áâà1,12áâà4,12áâà7,13,13áâà10
7700000000010110005
14áâà3,14áâà4,14áâà5,14áâà6,14áâà8
7700000000010110006
14áâà10,15,15áâà3,15_17áâà1
7700000000010110007
3,3,4,5,6,6ª1,7áâà1,7áâà2,7áâà5,7áâà6
7700000000010120001
7áâà7,7áâà8,7áâà9,7áâà10,7áâà11,8
7700000000010120002
8áâà1,8ª1,8ª2,8ª2áâà1,8ª2áâà2,8,9
7700000000010120003
9áâà1,10,10áâà1,10ª2,10,12,12ª1
7700000000010120004
1,1áâà1,3,3áâà2,3áâà4,4,4áâà2,5,5áâà3
7700000000010130001
5ª1,5,13,19,22,25,25áâà2,25áâà3
7700000000010130002
25áâà4,25áâà5,25áâà6,25áâà8,25áâà13,26
7700000000010130003
28,28áâà2,28áâà4,28áâà5,28áâà6,28áâà8
7700000000010130004
28áâà11,28áâà14,28áâà16,28áâà18
7700000000010130005
28áâà19,28áâà23,28áâà25,28áâà31
7700000000010130006
28áâà33,28áâà34,28ª2,28ª4,28ª5,28ª6
7700000000010130007
28ª8,28ª18,28ª33,28ª34,30,30áâà1
7700000000010130008
30áâà2,30áâà3,30áâà4,30áâà5,30áâà6
7700000000010130009
30áâà7,30áâà8,30áâà9,30áâà10,30áâà11
7700000000010130010
30áâà13,30áâà14,30áâà15,30áâà16
7700000000010130011
30áâà17,30áâà18,30áâà19,30áâà20
7700000000010130012
30áâà21,30áâà22,30áâà23,35,35áâà1
7700000000010130013
35áâà2,35áâà4,35áâà6,35áâà8,35áâà10
7700000000010130014
7700000000010130015
35áâà15,35áâà16,35áâà17,35áâà19
7700000000010130016
35áâà22,37,37áâà2,37áâà3,37áâà4,37ª2
7700000000010130017
37ª3,37ª4,39,39áâà1,39áâà2,39áâà6
7700000000010130018
39áâà7,39áâà8,39áâà9,39áâà18
7700000000010130019
11,11áâà2,11áâà3,11áâà5,11áâà6,11áâà7
7700000000010140001
11áâà8,11áâà9,11áâà10,11áâà11,11áâà12
7700000000010140002
11áâà13,11áâà15,11áâà16,11áâà17
7700000000010140003
11áâà18,11áâà19
7700000000010140004
7700000000010150001
2áâà4,2/10áâà1,2/10áâà2,2/10áâà3,4áâà1
7700000000010180001
4áâà3,4áâà4,4áâà9,6áâà1,6áâà2,6áâà3
7700000000010180002
6áâà7,6áâà1,8áâà1,8áâà4,8áâà4,8áâà5
7700000000010180003
8áâà6,8áâà7,14áâà1,14áâà2,20,22,22áâà2
7700000000010180004
24/6áâà1,24/6áâà2,26,30áâà1,30,32áâà1
7700000000010180005
34áâà1,36áâà1,40,40áâà2,44,46,48,50
7700000000010180006
1/3áâà1,1/3áâà2,1/3áâà2,5áâà1,5áâà2
7700000000010180007
5,7áâà1,7áâà2,9áâà1,9áâà4,11/12áâà1
7700000000010180008
13/14áâà1,13/14áâà3,13/14áâà4
7700000000010180009
13/14áâà9,15/10áâà1,15/10áâà4
7700000000010180010
15/10áâà5,15/10áâà7,17,19áâà1,19áâà2
7700000000010180011
19ª13,19,21áâà1,21áâà3,21áâà1
7700000000010180012
21áâà4,23,25áâà1,25áâà3,25áâà4
7700000000010180013
27/35áâà1,35,35áâà1,35ª1,35ª2,35ª3
7700000000010180014
7700000000010180015
43áâà6,49/28áâà1
7700000000010180016
1áâà1,1áâà2,3,5,5áâà1,5áâà3,7,7áâà1,9
7700000000010190001
117630
9áâà2,11
7700000000010190002
2,5/7,5/7áâà1,5/7áâà2,5/7áâà3,5/7áâà4
7700000000010200001
2/11,4
7700000000010210001
5/9,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000010210002
8áâà1,8áâà2,8áâà4,9áâà1,10áâà2,10áâà3
7700000000010210003
10áâà4,11áâà1,11áâà2,11áâà3,12áâà1
7700000000010210004
7700000000010210005
1áâà1,1áâà1,1áâà1,2,2áâà1,2áâà2
7700000000010240001
3áâà,3áâà1,4/28áâà1,4/28áâà2,5,6
7700000000010240002
7áâà1,7,8áâà1,10,11,12áâà1,13áâà1,14
7700000000010240003
15áâà1,16áâà1,17áâà1,18áâà1,19/25
7700000000010240004
20áâà1,21/30,22,23áâà1,24,25,26,27áâà1
7700000000010240005
27áâà7,29,31áâà1,31,33áâà1
7700000000010240006
1ª1,1ª1áâà3,2ª1,2ª2,2ª2áâà2,2ª3,2ª4
7700000000010260001
2ª5,2ª6,2ª6áâà2,2,4,4áâà1,4áâà2,4áâà3
7700000000010260002
7700000000010260003
4áâà10,4ª1,4ª1áâà10,4,4áâà2,4áâà3
7700000000010260004
7700000000010260005
4áâà10,4áâà12,4áâà15,4áâà16
7700000000010260006
4áâà17,4áâà18,4áâà19,4áâà23
7700000000010260007
4áâà25,4áâà26,4áâà33,4áâà34
7700000000010260008
4áâà38,4áâà40,4,4,5,6,6áâà2,6áâà3
7700000000010260009
6áâà5,6áâà8,7,9,11ª1,11,11áâà1,13
7700000000010260010
13áâà2,15/6,15
7700000000010260011
6áâà1,6áâà2,6áâà3,6áâà5,6áâà6,6áâà7
7700000000010270001
7700000000010270002
7700000000010270003
7700000000010270004
6áâà29,6áâà35,6áâà37,6áâà41,6áâà42
7700000000010270005
6áâà43,6áâà44,6áâà45,6áâà46,6áâà47
7700000000010270009
6áâà48,6áâà49,6áâà50,9,10,10áâà2
7700000000010270010
7700000000010270011
10áâà8,10áâà9,10áâà10,10áâà11,10áâà12
7700000000010270012
10áâà13,10áâà14,10áâà15,10áâà16
7700000000010270013
7700000000010270014
10áâà21,10áâà22,10áâà23,10áâà24
7700000000010270015
10áâà24,10áâà25,10áâà26,10áâà27
7700000000010270016
10áâà28,10áâà29,10áâà30,10áâà31
7700000000010270017
10áâà32,10áâà34,10áâà35,10áâà131
7700000000010270018
10áâà138,10áâà139,10áâà140,10áâà141
7700000000010270019
10áâà142,10áâà143,10áâà144,10áâà145
7700000000010270020
10ª1,10,10áâà1,10áâà2,10áâà3
7700000000010270021
10áâà1,10áâà2,10áâà3,10áâà4
7700000000010270022
10áâà5,10áâà6,10áâà7,10áâà8
7700000000010270023
10áâà9,10áâà10,10áâà11,10áâà13
7700000000010270024
10áâà16,10áâà18,10áâà19,10áâà20
7700000000010270025
10áâà21,10áâà22,10áâà23,10áâà27
7700000000010270026
10áâà42,10,10áâà2,11ª1,11ª1áâà2
7700000000010270027
11ª1áâà3,11ª2,11ª2áâà3,11,13ª1
7700000000010270028
13ª1áâà2,13ª2,13ª2áâà2,13,15ª1,15ª2
7700000000010270029
15ª2áâà2,15ª2áâà3,15ª3,15ª3áâà2,15ª4
7700000000010270030
15ª5,15ª6,15,17ª1,17ª2,17ª2áâà2,17ª3
7700000000010270031
17ª3,17ª4,17,18,19,19,19,20
7700000000010270032
20áâà3,20áâà4,21ª1,21ª1áâà2,21ª1áâà3
7700000000010270033
21ª2,21ª3,21ª4,22,22,22,22áâà2,22
7700000000010270034
23ª2,23ª2áâà2,23ª2áâà3,23ª3,25ª1
7700000000010270035
25ª1áâà2,25ª1áâà3,25ª2,25ª2áâà3
7700000000010270036
25ª2áâà4,25ª2áâà5
7700000000010270037
1ª1,1ª2,1ª2áâà2,1ª2áâà3,3ª1,3,3,5ª1
7700000000010270038
5ª2,5ª3,5ª3áâà1,5,7ª1,7ª1áâà2,7ª1áâà3
7700000000010270039
7ª2,7ª2áâà2,7ª2,7,7áâà2
7700000000010270040
3,3áâà2
7700000000010290001
3,3áâà1,3áâà3,3áâà4,3áâà5,3áâà6,4ª1
7700000000010300001
4ª2,6áâà1,6
7700000000010300003
7700000000010300002
1,1,2,4,5,6,8,10,12
7700000000010320001
7700000000010350001
119121
1ª1,1ª2,3áâà2,5,5áâà3,7,8,8áâà2
7700000000010360001
7700000000010370001
1áâà7,1áâà8,2,3,3áâà2,3ª1áâà1,3áâà1,4
7700000000010370002
5,6ª1,6ª2,7áâà1,7áâà2,8,8áâà1,8áâà2
7700000000010370003
8ª2,8ª3,8ª3áâà1,9,9áâà2,10,10ª1,10ª2
7700000000010370004
10ª3,10ª3áâà1,11ª1,11ª2,11ª3,12,13ª1
7700000000010370005
13ª2,13ª3,13ª3áâà2,13ª3áâà3
7700000000010370006
1,3,4,5/10,6,7/13,8,8áâà1,9,10,11/22
7700000000010380001
12,13,13áâà2,13áâà3,13,13áâà2
7700000000010380002
4,4áâà1,4áâà3,4ª2,4,4áâà2,4,8,9,9ª1
7700000000010390001
9ª1áâà2,9ª2,10,10áâà1,10áâà2,10ª1
7700000000010390002
10ª2,11
7700000000010390003
2áâà2,3,5,5áâà2
7700000000010400001
3,5áâà1,5áâà2,6áâà1,6áâà2,6áâà3,9áâà1
7700000000010410001
9áâà2,9áâà4,10,11,13áâà1,14,14áâà3
7700000000010410002
16áâà1,16áâà2,17,18áâà1,18áâà2
7700000000010410003
1,1áâà1,1áâà2,1,1áâà1,1áâà3,1áâà4
7700000000010450001
1áâà6,2,2,3/1,3/1áâà1,4,5,5áâà1,5,6
7700000000010450002
7,7áâà2,7,7,8,9ª1,9ª2,9áâà1,9áâà2
7700000000010450003
9áâà3,9áâà4,9áâà5,9áâà6,9áâà7,10
7700000000010450004
10áâà1,10áâà2,10áâà3,11ª1,11ª2
7700000000010450005
11ª2áâà2,12,12áâà2,12áâà3,12áâà4
7700000000010450006
12áâà7,13,14,15ª1,16,16áâà3,16áâà4
7700000000010450007
16ª1,16ª2,17áâà7,17ª1,18áâà1,18ª1,19
7700000000010450008
20,21áâà1,21áâà2,21áâà3,21áâà4,21áâà5
7700000000010450009
21áâà6,21áâà7,21áâà8,21áâà9,21áâà10
7700000000010450010
21áâà11,21áâà12,21áâà13,21áâà15
7700000000010450011
21áâà16,21áâà32,21áâà33,21ª10,22,23
7700000000010450012
7700000000010450013
23áâà6,24,24áâà1,24áâà6,26,26áâà2,28ª1
7700000000010450014
28ª2,28ª3,28ª4,28ª5,30,30áâà2,32
7700000000010450015
32áâà2,32áâà3,32áâà4,32áâà5,32áâà8
7700000000010450016
32áâà9,34,44,46áâà1,46áâà2,46áâà3
7700000000010450017
7700000000010460001
20áâà6,20áâà7,20ª2,22,22áâà1,22áâà2
7700000000010460002
22áâà3,22áâà4,22áâà5,22áâà6,22áâà7
7700000000010460003
22áâà8,22áâà9
7700000000010460004
3ª1,3ª1áâà3,3ª1áâà4,3ª2,4ª1,8,8áâà1
7700000000010460005
125212
8áâà2,9,9áâà1,9áâà2,9áâà3,9áâà4,9áâà5
7700000000010460006
9áâà6,9áâà7,9áâà8,9,10,14,14áâà1
7700000000010460007
14áâà2,14áâà3,14áâà1,16áâà1,16áâà2
7700000000010460008
16áâà3,16áâà4,16ª2,16ª2áâà2,16ª2áâà3
7700000000010460009
16ª2áâà4,16ª2áâà5,16ª2áâà6,18áâà1
7700000000010460010
18áâà2,18áâà3,24
7700000000010460011
6,7áâà1,7áâà2,7áâà3,8,10
7700000000010470001
1,1,1áâà1,1áâà2,3,3áâà2,3áâà3,4
7700000000010480001
4áâà2,4áâà3,5áâà3,5ª1,5ª1áâà3,5ª2,5,6
7700000000010480002
7,7áâà1,8,12,12áâà1,12áâà2,13,14,15
7700000000010480003
15áâà2,16,17,18,18,19,19ª2,19ª2áâà2
7700000000010480004
19ª2áâà3,19ª2áâà4,19ª2áâà5,20,21,21áâà3
7700000000010480005
1áâà4,1áâà5,1áâà8,1áâà13,1áâà14,1áâà15
7700000000010490001
1áâà46,1áâà48,1áâà49,1ª3,1ª4,1ª5,1ª6,2
7700000000010490002
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6,2
7700000000010490003
7700000000010490004
7700000000010490005
1áâà28,1áâà29,1áâà30,1áâà31,1áâà32
7700000000010490006
1áâà33,1áâà34,1áâà35,1áâà36,1áâà37
7700000000010490007
1áâà38,1áâà39,1áâà40,1áâà41,1áâà43
7700000000010490008
7700000000010490009
3áâà7,3áâà8,3áâà9,5áâà1,5áâà2,5áâà3
7700000000010490010
5áâà4,5áâà5,7,7,9,9áâà1,9áâà2,9áâà3
7700000000010490011
9áâà4,9áâà5,9áâà6,11áâà1,11áâà2,11áâà3
7700000000010490012
11áâà4,11áâà5,13áâà1,13áâà2,13áâà3
7700000000010490013
7700000000010490014
13áâà9,13áâà10,13,13áâà1,13áâà2
7700000000010490015
13áâà3,15áâà1,15áâà2,15áâà3
7700000000010490016
15áâà4,21áâà1,21áâà2,21áâà3,21áâà4
7700000000010490017
2/5,4
7700000000010500001
1,2ª1,2ª2,3,4ª1,4ª2,4ª2áâà1,5,7
7700000000010510001
7áâà1,7áâà2,13áâà1,15,17
7700000000010510002
1ª1,1ª2,1ª3,1ª3áâà4,3ª1,3ª2,3ª3,4,5
7700000000010520001
5áâà2,6,7,8,9ª1,9ª2,10,10áâà2,11ª1
7700000000010520002
11ª2,11ª2áâà2,11ª2áâà3,12,13,14,14,15
7700000000010520003
16,16áâà1,18,20,22,24,24áâà2,26,26,28
7700000000010520004
38áâà3
7700000000010520005
1,3,6,6áâà,6áâà,6áâà1,16,16áâà2
7700000000010530001
16áâà3,27,27áâà1,27áâà2,27áâà3,27áâà4
7700000000010530002
27áâà7,27áâà9,27áâà11,27áâà12,27áâà13
7700000000010530003
27áâà15,27áâà16,27áâà17,27áâà19
7700000000010530004
27áâà20,27áâà21,27áâà27,27áâà41
7700000000010530005
27áâà42,27áâà43,27ª5,28,28áâà2,29,35
7700000000010530006
35áâà2,35áâà3,35áâà4,35áâà9,37áâà10
7700000000010530007
37áâà19,39áâà1,39áâà2,39áâà3,41,41áâà2
7700000000010530008
41áâà3,41áâà4,41áâà6,41áâà8,41áâà10
7700000000010530009
41,41,41,41áâà1,41áâà2,41áâà3
7700000000010530010
41áâà4,41áâà5,47áâà1,47áâà2,47áâà2
7700000000010530011
47áâà3,47áâà4,47áâà5,47áâà6,47áâà7
7700000000010530012
47áâà8,47áâà9,47áâà10,47áâà11,47áâà12
7700000000010530013
47áâà13,47áâà15,47áâà16,47áâà17
7700000000010530014
47áâà18,47áâà20,47áâà21,47áâà22
7700000000010530015
47áâà23,47áâà25,47áâà26,47áâà27
7700000000010530016
47áâà28,47áâà46,47áâà47,47áâà48
7700000000010530017
47áâà51,47áâà52,47áâà53,49,49áâà1
7700000000010530018
49áâà2,49áâà3,49áâà4,49áâà5,49áâà6
7700000000010530019
49áâà10,49áâà14,49áâà15,49áâà19,51,53
7700000000010530020
6ª1,6ª2,10,10áâà3,10áâà4,10áâà5,14
7700000000010540001
14áâà2,14áâà3,14áâà4,16áâà1,16ª1,16ª2
7700000000010540002
18ª2,18ª2áâà1,18ª2áâà2,18ª2áâà3,18ª3
7700000000010540003
18ª4,18ª4áâà1,18ª4áâà2,20,21,22
7700000000010540004
22áâà1,22,22áâà3,23,23áâà2,23áâà3
7700000000010540005
24ª1,24ª2,24ª3,27,33/47,35,37,39,41
7700000000010540006
41áâà2
7700000000010540007
1,1ª1,1ª2,2,3ª1,3ª2,3ª3,4,5,5ª1,5ª2
7700000000010550001
5ª3,5ª4,5ª5,5ª6,5ª7,5ª8,5ª9,5ª9áâà1
7700000000010550002
5ª10,5ª12,5ª14,6ª1,6ª2,6ª2áâà1,6ª2áâà2
7700000000010550003
8,8áâà3,8ª2,10ª1,10ª1áâà2,10ª2
7700000000010550004
10ª2áâà1,10ª3,10ª4
7700000000010550005
7700000000010560001
1,2,3,4,5,6,7,8,10,11,12,13,14,15,16
7700000000010580001
17,18,19,20,21,22,23,23áâà1,24,26,27
7700000000010580002
28,30,31,33,34
7700000000010580003
1ª1,1ª2,1ª3,1ª3áâà2,1ª5,1ª5áâà1
7700000000010590001
1ª5áâà2,1ª6,1ª6,2áâà1,2áâà2,2áâà3
7700000000010590002
2áâà4,2áâà5,2áâà6,2áâà7,3ª1,3ª1áâà2
7700000000010590003
3ª1áâà3,3,4,4áâà2,4,4áâà2,4áâà3
7700000000010590004
4áâà1,4áâà2,4áâà3,4áâà4,5,5áâà2,5
7700000000010590007
6,6áâà2,6áâà3,6,6áâà1,6áâà3
7700000000010590008
6áâà4,6áâà6,6áâà7,6áâà8,6áâà9
7700000000010590009
6áâà10,6áâà20,6áâà23,6áâà24
7700000000010590010
6áâà25,6áâà26,6áâà27,6áâà28
7700000000010590011
6áâà30,6áâà31,6áâà33,6áâà34,6ª1
7700000000010590012
4áâà4,4áâà5,4áâà6,4,4áâà2,4áâà3
7700000000010590005
4,4áâà2,4áâà3,4áâà4,4áâà5,4áâà6
7700000000010590006
6ª3,7ª1,7ª2,9ª1,9ª1áâà2,9ª1áâà3
7700000000010590014
9ª1áâà4,9ª2,9ª2áâà2,9,11,11áâà2,11ª1
7700000000010590015
11ª1áâà2,11ª2,13ª1,13ª2,13ª3,13ª3áâà2
7700000000010590016
6,6áâà2,6áâà3,6ª1,6ª1áâà2,6ª1áâà3,6ª2
7700000000010590017
6ª3,6ª3áâà2,6ª3áâà3,15,15áâà2
7700000000010590018
1,2,2ª2,3,4,5,5áâà1,6,7,8,9,9áâà1
7700000000010600001
9áâà4,9ª2áâà2,10,11ª1,11ª2,12,13,14,15
7700000000010600002
15áâà1,15áâà2,15áâà3,15áâà6,15áâà7
7700000000010600003
7700000000010600004
15áâà13,15ª1,15ª2áâà1,15ª2áâà2
7700000000010600005
15ª2áâà3,16,16áâà1,16áâà2,16áâà3
7700000000010600006
16áâà5,16áâà6,17,17áâà3,17ª1,17ª1áâà2
7700000000010600007
18,18áâà1,18áâà2,18áâà3,18áâà4,18áâà5
7700000000010600008
18áâà7,18áâà8,18áâà9,18áâà10,18áâà11
7700000000010600009
18áâà12,18áâà13,18áâà15,18áâà16
7700000000010600010
18áâà17,18áâà18,18áâà19,18áâà20
7700000000010600011
18áâà21,18áâà22,18áâà23,18áâà24
7700000000010600012
18áâà25,18áâà26,18áâà28,18áâà32
7700000000010600013
18áâà33,18áâà35,18áâà37,18áâà42
7700000000010600014
18áâà43,18áâà44,18áâà45,18áâà46
7700000000010600015
18áâà48,18áâà56,18áâà57,19,19ª1
7700000000010600016
19ª1áâà1,19ª1áâà3,19ª2,21,23ª1,23ª2,25
7700000000010600017
25áâà1
7700000000010600018
2,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà9
7700000000010610001
115191
2áâà10,2áâà11,2áâà12,2áâà13,5,5áâà2
7700000000010610002
5áâà3
7700000000010610003
1,1,1,3
7700000000010620001
3áâà2,3áâà3,3áâà4,3áâà4
7700000000010630001
17ª1,17ª2,17ª3,17ª4,19,19ª1,19ª2,19_
7700000000010640001
21,21ª1,21ª2,21ª3,21ª4,21ª5,21ª6,21
7700000000010640002
21,23,23ª1,23ª1áâà3,23ª2,23ª3,23ª4
7700000000010640003
23ª5,23/54
7700000000010640004
15,15ª1,15ª2,15ª3,15ª3áâà1
7700000000010640005
20/29ª1,20/29ª2,22ª1,22ª1áâà1,22ª2
7700000000010640006
22ª3,24,24ª1,24ª2,24ª2áâà1,24ª3,24
7700000000010640007
26ª1,26ª2,26ª4,26ª4,26ª5,28ª1,28ª3
7700000000010640008
28,30
7700000000010640009
10ª2,10ª3,10ª3áâà1,10ª4,10ª4áâà1,10ª5
7700000000010640010
10ª6,10ª6áâà1,10,12,12áâà2,14,14ª1
7700000000010640011
14ª1áâà1,14ª2,14ª3,16,16ª2,16ª2áâà3
7700000000010640012
25áâà2,25ª1,25ª2,25ª3,27ª1,27ª2,27ª3
7700000000010640013
117418
27ª4,29ª1,29ª2,29ª3,29ª4,31áâà1,31ª1
7700000000010640014
31ª1áâà1,31ª2,36,36áâà1,36ª1,36ª1áâà1
7700000000010640015
1áâà1,1,2ª1,2ª1áâà1,2ª1áâà2,3,3áâà1
7700000000010640016
119313
3,4,4ª5,4ª6,4ª6áâà1,4,4áâà1,4áâà1
7700000000010640017
4,5ª1,5ª1áâà1,6,6,7,8,8áâà1,8ª1,8ª2
7700000000010640018
8ª3,8ª4,8ª4áâà1,8ª5,8ª6,8,8áâà1
7700000000010640019
9áâà2,11,11áâà1,11áâà2,13ª1,13ª2
7700000000010640020
2,3,4,5,5áâà3,6,7,8,10,12,14,14áâà1
7700000000010650001
14áâà2,30,37,37áâà1,39,41,42,42áâà2
7700000000010650002
42áâà3,42áâà4,44áâà1,44áâà4,44áâà5
7700000000010650003
44áâà10,44áâà11,44áâà12,44áâà20
7700000000010650004
7700000000010660001
7áâà1,9,11
7700000000010670001
2áâà1,2áâà2,6,6áâà3,8_10áâà1,8_10áâà2
7700000000010670002
8_10áâà8,12áâà1,12áâà2,12áâà6,12áâà7
7700000000010670003
12áâà8
7700000000010670004
1,3ª1,3ª2,4,5ª1,5ª2,5ª2áâà3,6,6ª2,7ª1
7700000000010680001
7ª2,8,9ª1,9ª2,10,10ª2,11,11ª2,11,12
7700000000010680002
12áâà2,12áâà3,13,14,14áâà2,15ª1,15ª2
7700000000010680003
16,16áâà2,17ª1,17ª2
7700000000010680004
5,7/4áâà1,7/4áâà2,7/4áâà3
7700000000010690001
115172
7700000000010700001
1áâà1,1áâà2,1áâà3,3áâà1,3áâà2,3áâà3
7700000000010700002
3áâà7,4_6áâà2
7700000000010700003
2,4ª1,4ª2,4ª3,4ª4,6,6ª2,8ª1,8ª2,8ª3
7700000000010720001
121108
8ª4,10,10áâà2,10áâà3,10áâà4,10áâà5
7700000000010720002
10áâà6,10áâà7,10ª1,10ª2,12áâà4,12ª1
7700000000010720003
12ª2,12ª3,14ª1,14ª1,14ª2,14ª2,14ª3
7700000000010720004
16,16áâà1,16áâà2,16áâà3,18,18áâà2,18ª1
7700000000010720005
20,22,22áâà1,30ª2,34,36,36áâà2,38,44ª1
7700000000010720006
44ª2
7700000000010720007
2,4,4áâà1
7700000000010730001
25ª1,27ª1,27ª2,27ª3,27ª4,27ª4áâà1,28
7700000000010730002
125373
7700000000010730003
28áâà7,28áâà8,28áâà9,28áâà10,29ª1,29ª2
7700000000010730004
29ª2áâà1,31,33ª1,35,35áâà1,35ª2,35ª3
7700000000010730005
35ª4,37ª1,37ª2,37ª2áâà1,37ª2áâà2,37ª3
7700000000010730006
37ª4,39ª1,39ª2,41ª1,41ª2,43,45ª1
7700000000010730007
45ª1áâà1,45ª2,45ª3,47ª1,47ª2,47ª2áâà1
7700000000010730008
49ª1,49ª2,51,51áâà2
7700000000010730009
1,1ª1,1ª1áâà2,1ª2,1ª2áâà1,1ª2áâà2,1ª3
7700000000010730010
1ª5,1/2,1/2áâà1,1/2áâà2,3,3áâà1,3ª1
7700000000010730011
3ª2,3ª5,5,5áâà1,5áâà2,5ª1áâà2,5ª3áâà1
7700000000010730012
6áâà2,6ª1,6ª2áâà1,6ª3,7,7ª1,7ª2,7ª4
7700000000010730013
7ª4áâà1,7ª4áâà2,7ª4áâà3,7ª5,7ª6,8ª1
7700000000010730014
8ª1áâà1,8ª1áâà2,8ª2,9ª1,9ª1áâà1
7700000000010730015
9ª1áâà2,9ª1áâà3,9ª2,9ª3,9ª3áâà1
7700000000010730016
9ª3áâà2,9ª4,9ª4áâà1,9ª5,10,10áâà3
7700000000010730017
10áâà5,10áâà6,10áâà7,10áâà8,10áâà9
7700000000010730018
10áâà11,10áâà12,10áâà13,10áâà15,10ª1
7700000000010730019
11áâà2,11ª1,11ª1áâà1,12áâà2,12ª1,12ª2
7700000000010730020
12ª2áâà1,13ª1,13ª1áâà1,13ª2,13ª3
7700000000010730021
13ª3áâà1,14ª1,14ª2,14ª3,15,15ª3,15ª4
7700000000010730022
15ª4áâà2,16ª1,16ª1áâà2,16ª2,16ª3,17ª1
7700000000010730023
17ª2,17ª2áâà1,17ª2áâà2,17ª2áâà3,17ª3
7700000000010730024
17ª4,17ª4áâà1,18áâà1,18ª1áâà1,18ª1áâà2
7700000000010730025
18ª2,19,19áâà1,20,20áâà1,20áâà2
7700000000010730026
20áâà13,20ª1,20ª1áâà2,20ª1áâà3
7700000000010730027
20ª1áâà4,20ª1áâà5,20ª1áâà6,20ª1áâà10
7700000000010730028
20ª1áâà16,20ª1áâà17,20ª1áâà19,21,22
7700000000010730029
22ª1,22ª1áâà1,22ª1áâà2,22ª1áâà4
7700000000010730030
22ª1áâà5,22ª2,22ª3,22ª3áâà1,22ª4,23ª1
7700000000010730031
2,2áâà2,4ª1,4ª2,6,7áâà2,8,9,9áâà1
7700000000010750001
7700000000010750002
9áâà8,9áâà9,9áâà10,9áâà11,9áâà12
7700000000010750003
1/25áâà1,3,3áâà2,11áâà1,12/3áâà1
7700000000010760001
13áâà1,13áâà3,13áâà4,13áâà5,15áâà3
7700000000010760002
19,19áâà2,19áâà3,19áâà4,19áâà7,20
7700000000010760003
1,1ª1,1ª2,3,3ª1,3ª2,3ª3,4ª1,4ª1áâà1
7700000000010770001
4ª2,5,5áâà1,5ª1,5ª2,5ª2áâà1,5ª3,6,6
7700000000010770002
7ª3,7ª4,7,8,8áâà1,8áâà2,8áâà3,9,9áâà1
7700000000010770003
9ª1,9ª1áâà1,9ª2,10,10áâà1,10,10áâà2
7700000000010770004
12,12áâà1,14,16,18,18áâà1,20,20,22ª1
7700000000010770005
22ª1áâà1,22,22áâà1,22áâà2,24áâà1
7700000000010770006
24,28,28áâà1,28áâà2
7700000000010770007
1áâà1,1ª1,3áâà1,3áâà2,3áâà3,3áâà4,3ª3
7700000000010780001
4áâà5,4áâà6,4áâà15,4ª1,5áâà1,5áâà2
7700000000010780002
6áâà1,6áâà2,6ª1,7,7áâà2,7áâà3,8áâà1
7700000000010780003
8áâà2,10áâà1,10áâà2,10áâà3,12,15
7700000000010780004
15áâà2,16áâà2,17,18áâà1,19,20áâà1
7700000000010780005
20áâà2,21,22,22áâà1,29,31áâà1,31áâà2
7700000000010780006
31áâà3,33,33áâà3,35,35áâà1,35áâà2,35áâà3
7700000000010780007
26áâà1,26áâà2,26áâà3,26áâà4,26áâà5
7700000000010780009
26áâà6,36áâà1,36áâà1,37,37áâà1,37ª2
7700000000010780010
40,42,44,45,47áâà2,47áâà3,47áâà4
7700000000010780011
47áâà5,47áâà6,47áâà7,47áâà15,48,48áâà2
7700000000010780012
48áâà3,50,51,53,54,55,56,56áâà2,57áâà1
7700000000010780013
57áâà2,57áâà3,57áâà4,58,59,59áâà2
7700000000010780014
60áâà1,60áâà2,62,62áâà2,64áâà1,64áâà2
7700000000010780015
65áâà1,65áâà2,65áâà3,65áâà4,65áâà5
7700000000010780016
68áâà1,76áâà1,76áâà2
7700000000010780017
1áâà1,4,4áâà1,4áâà7,4áâà8,4áâà11,11
7700000000010790001
105037
áâà1,1,3,3áâà1,5ª1,5ª2,5ª3,7ª1,7ª2,7ª3
7700000000010810001
123103
9ª1,9ª2,11ª1,11ª2,13ª1,13ª2,15,15áâà1
7700000000010810002
17,19ª1,19ª1áâà2,19ª2áâà1,23,23ª2,25ª1
7700000000010810003
25ª1áâà1,25ª2,25ª2áâà3
7700000000010810004
2,4,6ª1,6ª2,6ª3,6ª4,8ª1,8ª2,8ª3,8ª4
7700000000010810005
10ª1,10ª2,10ª2áâà2,10ª3,10ª3áâà1
7700000000010810006
10ª3áâà2,12,14,16ª1,16ª2,16ª2áâà2,20
7700000000010810007
22ª1,22ª2,24ª1,24ª2,24ª3,28ª1,28ª2
7700000000010810008
30áâà4,30ª1,30ª1áâà1,30ª2,30ª3
7700000000010810009
30ª3áâà4,30ª4,30ª5,30ª5áâà6,30ª6
7700000000010810010
30ª6áâà1
7700000000010810011
1,2,3ª1,3ª1áâà1,3ª1áâà2,3ª2,4,5,6,7,8
7700000000010820001
8ª1,8ª2,9,10,10,10,11,12,12áâà5,16
7700000000010820002
20,20áâà2,20áâà3,20áâà4,20áâà6
7700000000010820003
20áâà7,20áâà8
7700000000010820004
7áâà1,7áâà2,12,12áâà2,14
7700000000010830001
1/2,3,7
7700000000010840001
6,6áâà1,8,10ª1,10ª2,12,12áâà1,12,13
7700000000010850001
117216
13,13áâà1,13áâà1,14ª1,14ª2,16,16
7700000000010850002
1áâà2,3
7700000000010860001
7700000000010860002
7700000000010860003
7700000000010870001
9áâà1,9áâà6,9áâà6,9áâà7,10,12,12áâà4
7700000000010870002
1,3,3áâà2,3,5,6,6áâà2,7,8áâà4,8ª1,8ª2
7700000000010880001
8ª3,9,10ª1,10ª2,11ª1,12,13,13áâà2,14ª2
7700000000010880002
14ª3,14ª4,14ª5,15,15áâà2,16áâà6,16ª1
7700000000010880003
16ª2,16ª3,16ª4,16ª5,18,18áâà1,18áâà2
7700000000010880004
1ª1,1ª2,2,2,3,3áâà2,4áâà1,4áâà2,4áâà3
7700000000010910001
4áâà4,4áâà5,5,5áâà1,5áâà2,6,7,7
7700000000010910002
7áâà1,7áâà2,7áâà3,7áâà4,8áâà1
7700000000010910003
8áâà2,8,8áâà1,8áâà2,8áâà3,8áâà4
7700000000010910004
8áâà5,8áâà6,8áâà8,8áâà12,8,9áâà1
7700000000010910005
9áâà2,9áâà3,9áâà4,9áâà7,9áâà9,9áâà10
7700000000010910006
9áâà11,9áâà13,9áâà14,9áâà15,9áâà16
7700000000010910007
9áâà21,9áâà25,9áâà26,9áâà27,9áâà29
7700000000010910008
9áâà31,9áâà37,9áâà43,10ª1,10ª2,12ª1
7700000000010910009
12ª2,14,16,16,16áâà1,18,24
7700000000010910010
5,7,7,8,9,10áâà1,10áâà2,11,13
7700000000010920001
14/11áâà1,14/11áâà2,15
7700000000010920002
8,8áâà2
7700000000010990001
2,3ª1,3ª2,4,5,6,8,10,11,12áâà1,12ª2
7700000000011020001
13áâà1,13áâà2,14,15,16,17,17áâà1,19
7700000000011020002
10,10áâà2,10áâà3,10áâà4,10áâà5,10áâà6
7700000000011030001
10áâà7,10áâà8,10áâà10,10áâà11,10áâà12
7700000000011030002
7700000000011030003
10áâà17,12
7700000000011030004
2áâà1,2áâà2,2áâà3,2áâà5,2áâà6,4,6,6,8
7700000000011030006
8ª1,8ª2,8ª2,8ª3,8,8áâà2,10,10áâà2
7700000000011030007
10áâà3,10áâà4,10áâà11,10,14
7700000000011030008
1,1áâà1,1áâà1,3,3áâà2,3áâà3,5,5áâà1
7700000000011030009
7700000000011030010
7700000000011030011
7700000000011030012
5áâà21,5áâà22,5áâà23,5áâà24,5áâà26
7700000000011030013
5áâà27,11áâà1,11áâà2,11áâà3,11áâà4
7700000000011030014
11áâà5,11áâà6,11áâà7,11áâà8,11áâà10
7700000000011030015
11áâà12,11áâà13,13áâà1,13áâà2,13
7700000000011030016
13áâà1,13áâà2
7700000000011030017
11áâà17
7700000000011030005
22áâà1,22áâà2,23áâà1,23áâà2,23ª2
7700000000011040001
117463
23ª2áâà2,23ª3,23áâà1,24ª1,24ª1áâà2
7700000000011040002
24ª1áâà3,24ª2,25ª1,25ª1áâà1,25ª1áâà2
7700000000011040003
25ª2,25ª2áâà1,25ª2áâà2,28,28ª2,28ª3
7700000000011040004
29ª1,29ª1áâà1,29ª1áâà2,29ª1áâà3,29ª2
7700000000011040005
29ª2áâà1,29ª2áâà2,29ª3,29ª3áâà1
7700000000011040006
29ª3áâà2,31ª1,31ª2,32áâà1,32ª2,32/2
7700000000011040007
32/2áâà3
7700000000011040008
2,2,3ª1,3ª1áâà1,3ª1áâà2,4áâà1,4áâà2
7700000000011040009
4áâà3,4áâà4,5áâà2,5ª1,5ª1áâà1
7700000000011040010
5ª1áâà2,5ª2,5ª3,5ª4,6,6,6áâà1,6áâà2
7700000000011040011
7ª2,7ª2áâà1,7ª2áâà2,7ª2áâà3,7ª2áâà4
7700000000011040012
7ª3,7ª4,7ª5,7ª5áâà1,7ª5áâà2,8áâà1
7700000000011040013
8áâà2,8,8áâà1,9,9áâà1,9áâà2,10ª1
7700000000011040014
10ª1áâà1,10ª1áâà2,10áâà1,10áâà2
7700000000011040015
10áâà3,10áâà4,13ª1,13ª1áâà1,13ª1áâà2
7700000000011040016
13ª2,15/10,15/10áâà1,15/10áâà2
7700000000011040017
15/10áâà3,16,16áâà1,17áâà1,17áâà2,17/9
7700000000011040018
19,19áâà1,19áâà2,21ª2,21ª2áâà2
7700000000011040019
21ª2áâà3,21ª2áâà4,21ª3
7700000000011040020
1,2/10áâà1,2/10áâà2,3_5áâà1,3_5áâà2
7700000000011050001
3_5áâà3,3_5áâà6,4,6,7,10/8ª1,14,14áâà2
7700000000011050002
14áâà3,16áâà1
7700000000011050003
8/10áâà1,8/10áâà5,10áâà1,10áâà6
7700000000011070001
1/8áâà4,1/8áâà5
7700000000011080001
1,1,2áâà1,3áâà4,3áâà6,3ª1,3ª2
7700000000011090001
3ª3,4áâà1,4,4áâà2,4áâà7,5ª9,6
7700000000011090002
7áâà3,7áâà6,7áâà17,7ª1,7ª2,7ª3,7áâà1
7700000000011090003
7áâà1,7áâà12,7ª4
7700000000011090004
3áâà1,3/5,3áâà1,3áâà1,3áâà2,3áâà3
7700000000011100001
4áâà1,5áâà1,5áâà4
7700000000011100002
1áâà2,1áâà3,1áâà4,1áâà4,3áâà1,3áâà3
7700000000011110001
3áâà5,3áâà7,9/16áâà1,9/16áâà2,9/16áâà3
7700000000011110002
9/16áâà5
7700000000011110003
3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,4áâà1
7700000000011130001
4áâà2,4áâà3,4áâà4,7,8áâà6
7700000000011130002
3,6,6áâà2
7700000000011140001
6áâà1,6áâà1,6áâà1,8/40,8/40áâà2
7700000000011150001
1/6,3,4áâà1,4áâà2,4áâà3,4áâà4,5,5,6
7700000000011160001
127254
6,6,7,7,7áâà1,7áâà2,8/13,9,9áâà2
7700000000011160002
9,11,11áâà2,11áâà3,13,13ª1,13
7700000000011160003
13áâà1,13,15,15áâà1,15,15,17ª1
7700000000011160004
17ª2,17ª3,17ª4,17,17ª1,17ª2,17ª3
7700000000011160005
17ª4,17ª4áâà1,17,17,19,19,19,19
7700000000011160006
2áâà22,2áâà23,2áâà24,2áâà25,2áâà28
7700000000011170001
7700000000011170002
7700000000011170003
2áâà12,2áâà13,2áâà14,2áâà15,2áâà16
7700000000011170004
2áâà17,2áâà18,2áâà19,2áâà20,2áâà21
7700000000011170005
2áâà45,2áâà46,2,3,3áâà3,4,4áâà2,4áâà3
7700000000011170006
4áâà7,4áâà10,4áâà11,4ª1,4ª1áâà2
7700000000011170007
4ª1áâà3,5,5áâà2,5áâà3,5áâà4,5áâà5
7700000000011170008
5áâà6,6,6ª2áâà1,6ª2áâà2,6ª2áâà7
7700000000011170009
6ª2áâà9,6ª2áâà10,6ª2áâà11,6ª2áâà8,7ª1
7700000000011170010
7ª2,7ª2áâà1,7ª2,7ª3,7ª3áâà2,7ª4,8áâà1
7700000000011170011
8áâà2,8áâà3,8áâà4,9ª1,9ª2,9ª3,9ª4
7700000000011170012
10áâà1,10áâà2,10áâà3,10ª2,10ª2áâà2
7700000000011170013
10ª3,10ª3áâà2,10ª3áâà3,11ª1,11ª2,11ª3
7700000000011170014
11ª4,12,12áâà4,12ª2,12ª2áâà1,12ª2áâà2
7700000000011170015
12ª2áâà4,12ª2áâà5,12ª2áâà6,12ª2áâà7
7700000000011170016
12ª2áâà8,12ª2áâà9,12ª2áâà10,12ª2áâà11
7700000000011170017
12ª2áâà12,12ª2áâà13,12ª2áâà14
7700000000011170018
12ª2áâà15,12ª2áâà16,12ª2áâà17
7700000000011170019
12ª2áâà18,12ª2áâà19,12ª2áâà20
7700000000011170020
12ª2áâà21,12ª2áâà22,12ª2áâà25
7700000000011170021
12ª2áâà26,12ª2áâà27,12ª2áâà28
7700000000011170022
12ª2áâà29,12ª2áâà30,12ª2áâà31
7700000000011170023
12ª2áâà32,12ª2,12,12áâà2,12áâà3
7700000000011170024
12áâà4,12áâà5,12áâà6,12áâà7
7700000000011170025
12áâà8,12áâà9,12áâà10,12áâà11
7700000000011170026
12áâà12,12áâà13,12áâà14,12áâà16
7700000000011170027
12,17ª1,17ª2,17ª2áâà3,17ª3,17,19ª1,27
7700000000011170028
1áâà1,1áâà2,1áâà8,1,2,2áâà1,2,2,2
7700000000011180001
3,4áâà1,4áâà4,4áâà5,4áâà6,4áâà7,4áâà8
7700000000011180002
4áâà9,4áâà10,4áâà12,4áâà14,4áâà15
7700000000011180003
4áâà20,4áâà21,4áâà22,5/1,9,11áâà1
7700000000011180004
2/7,3/30,4,20áâà1
7700000000011190001
1,2/6,3/5,6,9/1,11
7700000000011200001
3áâà2,4,6,9,9áâà2,10,12
7700000000011210001
8,12,12áâà2,12áâà3
7700000000011210002
7700000000011210003
115419
3áâà1,3áâà2,3áâà3,3ª1,4,4áâà4,4áâà13
7700000000011220001
4áâà55,4ª1áâà12,4ª1,4ª2,4ª3,4ª5áâà7
7700000000011220002
4ª6,4ª7,4ª8,5,6ª1,6/1áâà1,6/1áâà2,7
7700000000011220003
7áâà1,8,9áâà1,10,11_13,11_13áâà2
7700000000011220004
12áâà1,12áâà2,12áâà4,12áâà6,12áâà7
7700000000011220005
12áâà8,14,14áâà2,15,15áâà2,16,17
7700000000011220006
18áâà2,18áâà3,18/20áâà1,19,19áâà4,21
7700000000011220007
21áâà2,23áâà1,23áâà2
7700000000011220008
2áâà1,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000011250001
4áâà6,4áâà7
7700000000011250002
3,4_6áâà1,4_6áâà2,4_6áâà3,4_6áâà4
7700000000011260001
4áâà2,4áâà3,4áâà4,4áâà5,4ª1,8,10
7700000000011260002
7700000000011260003
10áâà7,10áâà8,10áâà9
7700000000011260004
1,2áâà1,3,4ª9,4,4ª8,5,5,6,6ª1,7,7
7700000000011270001
7áâà1,7ª2,7,8,8ª1,9,9,9,9,10ª5
7700000000011270002
10,10áâà1,10áâà2,11áâà3,12,12ª6
7700000000011270003
1áâà1,2,4,4áâà2,4,4áâà1,4,6ª2,6,6
7700000000011280001
7,7,8ª1,8ª2,9,9áâà1,9áâà2,9áâà3
7700000000011280002
9áâà4,9áâà5,9áâà6,9,9,9áâà2,10
7700000000011280003
10áâà1,11áâà1,11áâà2,24áâà4,24áâà5
7700000000011280004
94,95,96,97,97áâà1,97áâà2,99ª1,99ª2
7700000000011290001
100áâà12,101,105,105áâà1
7700000000011290002
7700000000011300001
17,17áâà10,35,35áâà1,35áâà2,35áâà3
7700000000011310001
35áâà4,35áâà5,35áâà6,35áâà7,35áâà8
7700000000011310002
35áâà9,35áâà10,47,52,54,54áâà3,54,58
7700000000011310003
58,64,64,70
7700000000011310004
1,2,2áâà2,2,3,3,4,6,6áâà1
7700000000011310005
25,25áâà1,25áâà3,25áâà4,25áâà5,25áâà6
7700000000011320001
25áâà7,33/1,33/1áâà1,33/1áâà1
7700000000011320002
33/1áâà2,33/1áâà3,33/1áâà4,33/1áâà5
7700000000011320003
33/1áâà6,33/1áâà7,33/1áâà8,33/1áâà9
7700000000011320004
33/1áâà10,33/1áâà10,33/1áâà11
7700000000011320005
33/1áâà12,33/1áâà13,33/1áâà14
7700000000011320006
33/1áâà15,33/1áâà16,33/1áâà17
7700000000011320007
33/1áâà18,35
7700000000011320008
32,32áâà2,34ª1,34ª2,34ª3,34ª3áâà1,36
7700000000011320009
36áâà1,37ª1,37ª2,39ª1,39ª2,39ª3,39ª4
7700000000011320010
39ª5,39ª6,39ª7,39ª7áâà1,41áâà1,41áâà2
7700000000011320011
41,41áâà4,43áâà5,43ª1,43ª1áâà1,43ª2
7700000000011320012
43ª3,43ª4,43ª5,43ª6,43ª7,43ª8
7700000000011320013
4áâà1,4ª2,4ª3,4ª4,4/9áâà1,9áâà1
7700000000011350001
129626
9áâà2,9áâà3,9áâà4,9áâà5,9áâà6,9áâà10
7700000000011350002
9,10/12ª1áâà1,10/12ª1áâà2,10/12ª1áâà3
7700000000011350003
10/12ª1áâà4,10/12ª2,10/12ª3,12,12áâà1
7700000000011350004
12áâà1,12áâà2,14ª1,14ª2,14,14
7700000000011350005
2,4,5,5áâà1,5áâà2,6,7,7áâà1,8,8áâà1
7700000000011360001
127224
45280583000
8áâà2,8,9,10,10,10áâà1,11,11áâà1
7700000000011360002
11áâà2,11,12,12áâà2,14,16,18ª1
7700000000011360003
18ª1áâà1,18ª2,18ª2áâà2,18ª3,18ª3áâà2
7700000000011360004
18ª4,20,22
7700000000011360005
1,3ª1,3ª2,3ª3,3,3,3,11
7700000000011360006
127282
3ª1,3ª2,3ª2áâà1,5/1ª1,5/1ª2,5/1ª3,6,6
7700000000011390001
8,9ª2,9ª2áâà1,10,10áâà,10,10áâà1
7700000000011390002
10áâà2,11ª1,11ª2,11ª2áâà1,11áâà1
7700000000011390003
11áâà2,12,12áâà1,12,13/23ª1,13/23ª2
7700000000011390004
13/23ª3,13/23ª4,14,16
7700000000011390005
áâà12,áâà18,1,1ª1,1ª2,1ª2áâà1,1ª3
7700000000011400001
1ª3áâà1,1ª3,1ª4,1ª5,1ª6,1ª7,1ª7áâà1
7700000000011400003
1ª7áâà2,1ª8,1ª8áâà1,1ª9,1,1,1,1,2
7700000000011400004
3ª1,3ª1áâà1,3ª2,3ª2áâà1,3ª3,3,4,5
7700000000011400005
5áâà1,5áâà2,5,6,7,7áâà1,7áâà2,7áâà3
7700000000011400006
7áâà4,7áâà5,7áâà6,7áâà7,7áâà8,7áâà9
7700000000011400007
7áâà10,7áâà11,7áâà13,7áâà14,7áâà15
7700000000011400008
7áâà16,7áâà17,7áâà18,7áâà19,7áâà20
7700000000011400009
7áâà21,7áâà22,7áâà23,7áâà24,7áâà24
7700000000011400010
7áâà25,7áâà26,7áâà27,7áâà29,7áâà30
7700000000011400011
7áâà31,7,8,8áâà1,9,10,11,11áâà1,11
7700000000011400012
12,12áâà1,12ª1,13,13áâà1,14,14áâà1
7700000000011400013
14áâà2,14áâà3,15,15áâà,15,15,18
7700000000011400014
18ª1,18ª2,18ª3áâà1,18ª3áâà2,20,20áâà1
7700000000011400015
5
7700000000011400002
18,28,28áâà2,28áâà3,28ª1,30,30ª1,32
7700000000011400016
117628
34,34áâà2,34áâà3,34ª1,36,36ª1,40
7700000000011400017
40áâà2,40áâà3,40áâà4,40ª1,42,42áâà1
7700000000011400018
1,2áâà3,2áâà4,2ª1,2ª2,3,5,7,8áâà2,8ª1
7700000000011430001
8ª3,9,10ª2,10ª3,10ª3áâà2,10ª4,10ª4áâà2
7700000000011430002
11áâà1,12ª1,12ª2,13,14,15,15,16áâà1
7700000000011430003
17,18ª1,18ª2,18ª2áâà3,18ª2,20,20áâà2
7700000000011430004
21ª1,21ª2,21ª3,21ª4,23ª1,23ª2,23ª3
7700000000011430005
23ª4,23ª5,23ª5,23ª6,24ª1,24ª2,25
7700000000011430006
3,3áâà1,4ª1,4ª2,5,5,5áâà1,6,7,8,9
7700000000011440001
9áâà2,9,10,10áâà2,12,12áâà2,12áâà3
7700000000011440002
12áâà4,12áâà5,12áâà6,12áâà7,12áâà8
7700000000011440003
7700000000011440004
12áâà14,15áâà1,18,18áâà4,20
7700000000011440005
7áâà2,9áâà1,11áâà1,19
7700000000011450001
30,30áâà1,30áâà2,32áâà1,32áâà10
7700000000011460001
32áâà11,32_34áâà2,32_34áâà3,32_34áâà5
7700000000011460002
7700000000011460003
32_34áâà6,32_34áâà8,36áâà3,36áâà6
7700000000011460004
36áâà4,36áâà5,36áâà5,38áâà1,40ª1
7700000000011460005
40ª2,42,42áâà2,50,52
7700000000011460006
39,39áâà4,56,57áâà1,57áâà2,58,59áâà1
7700000000011460007
60áâà1,60áâà2,61áâà1,61áâà2,62,63áâà1
7700000000011460008
67áâà1,67áâà2,70,72áâà1,72áâà2
7700000000011460009
8áâà34,8áâà36,8áâà37,8áâà38,8áâà39
7700000000011460010
1áâà1,1áâà2,1áâà3,1áâà5,1áâà6,1áâà7
7700000000011460011
1áâà8,1áâà10,1áâà11,1áâà17,1áâà20
7700000000011460012
1áâà23,1áâà25,1áâà27,1áâà31,1áâà32
7700000000011460013
1áâà34,1áâà50,1áâà79,1áâà99,1áâà101
7700000000011460014
1áâà102,1áâà102,1áâà103,1áâà104
7700000000011460015
1áâà105,1áâà106,1áâà108,1áâà109
7700000000011460016
1áâà110,2/12áâà1,2/12áâà3,3áâà1,3áâà2
7700000000011460017
4_6áâà1,4_6áâà1,4_6áâà3,4_6áâà4
7700000000011460018
4_6áâà6,4_6áâà9,4_6áâà11,4_6áâà13
7700000000011460019
4_6áâà14,4_6áâà15,4_6áâà16,4_6áâà17
7700000000011460020
4_6áâà18,5áâà2,5áâà3,8áâà1,8áâà2
7700000000011460021
8áâà2,8áâà7,8áâà8,8áâà10,8áâà11
7700000000011460022
8áâà25,8áâà26,8áâà26,8áâà27,8áâà27
7700000000011460023
8áâà39,8áâà39,8áâà39,8áâà40,8áâà41
7700000000011460024
8áâà42,8áâà43,8áâà44,8áâà45,8áâà46
7700000000011460025
8áâà47,8áâà52,8áâà57,8áâà58,8áâà59
7700000000011460026
8áâà60,9,10áâà1,10áâà2,10áâà3,10áâà4
7700000000011460027
10áâà5,10áâà6,10áâà7,12,12áâà2,12áâà3
7700000000011460028
12áâà4,12áâà11,14,16,18,20,20áâà2,22
7700000000011460029
13áâà1,13áâà3,13/2,13áâà1,15áâà1
7700000000011460031
123557
15áâà2,15áâà3,15áâà4,17áâà1,17áâà2,19
7700000000011460032
23áâà1,37,37áâà2,37
7700000000011460033
76,76áâà2
7700000000011460034
3,6,6áâà2,10áâà1,12,16,20/13áâà1
7700000000011470001
3_9,4áâà1,4áâà2,15áâà1,15áâà2,15áâà3
7700000000011470002
15áâà5,15áâà7,15áâà8,15áâà10,15áâà15
7700000000011470003
15áâà17,19/2,21,23áâà1,23áâà2,23áâà4
7700000000011470004
23áâà5,23áâà6,24áâà1,24áâà3,25áâà1
7700000000011470005
25áâà2,25áâà5,25áâà7,26áâà1,26áâà2
7700000000011470006
27áâà2,27/13áâà1,28,28áâà2,29,29áâà1
7700000000011470007
29áâà3,31,33,33áâà2,34,35,37,37áâà2
7700000000011470008
37áâà3,38,38áâà3,39,41,43,44/30áâà1,46
7700000000011470009
52/34áâà1,52áâà1,52áâà2
7700000000011470010
3áâà3,3áâà9,3áâà10,3,3áâà2,9áâà1
7700000000011480001
7700000000011480002
11áâà7,11áâà10,11áâà11,11áâà15,11áâà19
7700000000011480003
7700000000011480004
11áâà20,11áâà22,23_25áâà1,23_25áâà2
7700000000011480005
14,16,16áâà2,18/15,22áâà1,26áâà1
7700000000011480006
26áâà2,26áâà3,26áâà6,28/45
7700000000011480007
3áâà1,3áâà2,3áâà3,3,3áâà2,4,6,8,10
7700000000011490001
12,14,16
7700000000011490002
7,7áâà1,9,14,14áâà1
7700000000011500001
3,3áâà2,3áâà3,3ª1
7700000000011500002
4,6,6áâà1,6ª1,8
7700000000011500003
7700000000011510001
121352
áâà8,1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà6
7700000000011510002
2áâà6,2ª1,2ª3,2ª5áâà2,2ª5áâà6,2ª6,2ª7
7700000000011510003
3,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,4ª1
7700000000011510004
4ª2,4ª3,4ª3áâà2,5,5áâà2,5áâà3,6,6áâà2
7700000000011510005
7áâà5,7ª10,8ª1,8ª2,9,9áâà2,10áâà7
7700000000011510006
10áâà8,10ª1,10ª2,10ª3,10ª4,10ª4áâà3
7700000000011510007
10ª4áâà4,10ª5,10ª6,11,12áâà1,12ª1,12ª2
7700000000011510008
12ª3,12ª4,12ª5,12ª6,12ª7,14ª1,14ª1áâà2
7700000000011510009
14ª2,16,17áâà1,18,18áâà1,18ª1
7700000000011510010
2ª1,2ª1áâà2,2ª2,4
7700000000011520001
1,1,2,3,4,5,6áâà1,7,8,9,10,11,12,13
7700000000011530001
14,15áâà1,16,17,18,19,20,21áâà1,22áâà2
7700000000011530002
23áâà1,23áâà2,24,25,30
7700000000011530003
2ª1,2ª2,2ª3,2ª4,4áâà23,4ª1,4ª2,4ª2áâà2
7700000000011540001
115114
4,6,6ª1,6ª1,6ª2,6ª3,6ª4,6ª4áâà2,6ª5
7700000000011540002
6,8,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5
7700000000011540003
8áâà6,8áâà7,8áâà9,8áâà10,8áâà11,8áâà12
7700000000011540004
8áâà13,8áâà13,8áâà14,8áâà15,8áâà16
7700000000011540005
8áâà19,8áâà20,8áâà22,8áâà23,8áâà24
7700000000011540006
8áâà25,8áâà29,8áâà29,8áâà31,8áâà38,8
7700000000011540007
8áâà2,8áâà2,8áâà3,8áâà4,8áâà5
7700000000011540008
7700000000011540009
8áâà11,8áâà13,8áâà17,8áâà18
7700000000011540010
8áâà19,8áâà21,8,8áâà2
7700000000011540011
7700000000011560001
7700000000011560002
7700000000011560003
1áâà18,1áâà19
7700000000011560004
11,13,13áâà2,13
7700000000011560005
2,10,20,22,22áâà1,22áâà2,22áâà3,22áâà4
7700000000011560006
22áâà5,22áâà6,22áâà7,22áâà8,22áâà9
7700000000011560007
22áâà10,22áâà12,22áâà13,22áâà14
7700000000011560008
22áâà15,22áâà16,22áâà17,22áâà18
7700000000011560009
22áâà19,22áâà20,22áâà21,22áâà22,22áâà23
7700000000011560010
1,2,3,4,5,6,7,7áâà1,7áâà2
7700000000011590001
1áâà1,1áâà23,2,2áâà1,2áâà2,2áâà3,2áâà4
7700000000011600001
2áâà5,3áâà1,3áâà2,5áâà1,5áâà3,5áâà4
7700000000011600002
5áâà16,7áâà1,7áâà1,7áâà2,9,9,11
7700000000011600003
13áâà1,13,17/2áâà1,21,23áâà1,23áâà2
7700000000011600004
25áâà1,25áâà2,25áâà3,25áâà1,25áâà2
7700000000011600005
25áâà3,27,29áâà1,31,33
7700000000011600006
1áâà1,2áâà1,3áâà1,4,4áâà2,4áâà3,4áâà4
7700000000011610001
4,5áâà1,7,8áâà1,8áâà2,9áâà1,9áâà2
7700000000011610002
9áâà1,10,11áâà1,11áâà13,12,12áâà2
7700000000011610003
12áâà3,13,14/11áâà1,14/11áâà2
7700000000011610004
14/11áâà3,14/11áâà10,15/13,16/14áâà1
7700000000011610005
17/16,18,19,20,21áâà1,21áâà2,22,23áâà1
7700000000011610006
23áâà3,24,25,25áâà1,26áâà1,26áâà2
7700000000011610007
27áâà1,27áâà2,28áâà1,28áâà2,29,30
7700000000011610008
31áâà1,31áâà11,31áâà13,31áâà14,32áâà1
7700000000011610009
32áâà2,32áâà3,33/1,35/2áâà1,35/2áâà6
7700000000011610010
1áâà1,1áâà2,2,2,3áâà1,3áâà2,3áâà3
7700000000011620001
3áâà8,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000011620002
5áâà1,5áâà7,6áâà1,6áâà2,6áâà3,6,7áâà1
7700000000011620003
7,7áâà1,8áâà1,9_9áâà1,9_9áâà2,10
7700000000011620004
11áâà1,12áâà1,12áâà3,13,14áâà1,15
7700000000011620005
16/20áâà3,17/17,18áâà1,20_20
7700000000011620006
20_20áâà2,20_20áâà3,21_23,21_23áâà1
7700000000011620007
21_23áâà2,22áâà1,22áâà8,22áâà1
7700000000011620008
24_24áâà3,24_24áâà15,25áâà1,26,27
7700000000011620009
29áâà1,29áâà12,31,33,35/5áâà1,35/5áâà2
7700000000011620010
36/4áâà1,36/4áâà2,36/4áâà3,37/6,38áâà1
7700000000011620011
39áâà1,39áâà2,39áâà3,41áâà1,41áâà2
7700000000011620012
41áâà3,41áâà4
7700000000011620013
3,4áâà2,5/4,6,9,11áâà1,12,14,16áâà1,17
7700000000011630001
8,11/36,14/51,19,32áâà1,34áâà1,36áâà1
7700000000011640001
7700000000011640002
7700000000011650001
2ª1,2ª2,2ª3,2ª4,2,2,4áâà5,4ª1,4ª2
7700000000011660001
4ª3,4ª4,6,6ª1,6ª2,6ª3,8áâà2,8ª1,8ª2
7700000000011660002
8ª3,8ª4,8ª5,8ª5áâà2,8ª6,8ª7,10,10ª1
7700000000011660003
10ª2,10ª3,10ª5,10ª5áâà1,10ª6,12ª1,12ª2
7700000000011660004
12ª3,12ª4,12ª5,12ª5áâà1,12ª6,14,14áâà2
7700000000011660005
16áâà1,18
7700000000011660006
1ª1,1ª1áâà1,1ª2,1ª3,3ª1,3ª2,3ª3
7700000000011660007
3ª3áâà2,3ª3áâà1,3ª4,3ª5,3,5,5áâà3
7700000000011660008
5ª1,5ª1áâà1,5ª1áâà2,7ª1,7ª2,7ª2áâà1
7700000000011660009
7ª3,7ª4,7ª5,7ª5áâà5,7ª6,9,9áâà1,11
7700000000011660010
7700000000011660011
7700000000011670001
4,4áâà1,6áâà1,6áâà2,6áâà3,6áâà4,6áâà7
7700000000011670002
8,8áâà1,10,10áâà1,12ª1,12ª1áâà1
7700000000011670003
12ª1áâà2,14áâà12,14áâà13
7700000000011670004
7700000000011690001
2,2ª1,2ª2,7
7700000000011700001
1,2áâà1,2áâà1,2áâà2,2áâà3,2áâà4
7700000000011700002
2áâà5,2áâà6,2áâà7,2áâà8,4,4áâà2,4
7700000000011700003
4áâà1,4áâà1,6,7,7áâà2,7áâà3,8ª1,8ª2
7700000000011700004
9,9áâà1,9,14,14,15,16,16áâà2,16áâà3
7700000000011700005
16áâà4,16áâà5,16áâà5,17,25,27,27áâà1
7700000000011700006
27áâà2
7700000000011700007
4,4áâà3
7700000000011710001
121099
3,3áâà2,3áâà4,5,9áâà1,11,15áâà1,15áâà2
7700000000011710002
2,3áâà1,4,4áâà2,5áâà2,5áâà3,5áâà4
7700000000011720001
1,2,4,5,6,7,7,8,8áâà2,8,9,10,11,12
7700000000011730001
105173
45263561000
12,12áâà1,12áâà2,12,12áâà2,13,14
7700000000011730002
14,15,16,16áâà1,16,17,17áâà1,18,18
7700000000011730003
19,20,20,21,22,22,23,24,24,26
7700000000011730004
3,4áâà1,4áâà2,4áâà3,5áâà1,5áâà2,6áâà1
7700000000011740001
6áâà2,7,8áâà1,8áâà2,8áâà3,9,10áâà2
7700000000011740002
10áâà3,10/11áâà1,15ª1,15ª2
7700000000011740003
20,22ª1,22ª2,22ª2áâà1,22ª3,22ª4
7700000000011750001
22ª4áâà1,23,23áâà1,23ª2,23,23áâà1
7700000000011750002
23áâà2,23,23,23,24,25ª1,25ª2,25ª3
7700000000011750003
25ª3áâà1,25ª5,26ª1,26ª2,26ª3,27ª1,27ª2
7700000000011750004
27ª2áâà2,27ª3,27ª3áâà1,28,29ª1,30ª1
7700000000011750005
30ª2,30ª3,30ª3áâà1,32,34,34áâà2,36
7700000000011750006
36áâà2,38,38,38áâà1,38áâà2
7700000000011750007
2,2,2,3,5,5ª1,6ª1,7,8,8ª1,8ª2,9ª1
7700000000011750008
127642
9ª1áâà1,9ª2,9ª2áâà2,9ª3,10,10áâà1,11ª1
7700000000011750009
11ª1áâà1,11ª2,12ª1,12ª1áâà1,13,14,15ª1
7700000000011750010
15ª2,17,17áâà1,17áâà2,17,18,19áâà2
7700000000011750011
19ª1,19ª2
7700000000011750012
20ª1,20ª2,20ª3,20ª3áâà1,20,20,22
7700000000011760001
22áâà1,22áâà2,22,24,24áâà1,24
7700000000011760002
24áâà1,26,26,26,28ª1,28ª1áâà1,28ª2
7700000000011760003
28ª2áâà1,28,32,34,34,36,36ª1
7700000000011760004
36ª1áâà1,36ª1áâà2,36,36,36áâà1,38
7700000000011760005
38ª1,40
7700000000011760006
17,17áâà1,17,21,21áâà1,21áâà4,21
7700000000011760007
127490
21áâà1,21áâà2,21,21,27,27áâà1,29
7700000000011760008
29áâà1,29áâà2,29,29áâà2,29,35
7700000000011760009
35áâà1,35áâà2,35,35áâà1,35,35
7700000000011760010
35áâà1,39,39áâà2,43,43áâà1,43áâà2,45
7700000000011760011
45áâà1,45áâà2,45áâà3,45áâà1
7700000000011760012
45áâà2,45áâà6,45,47,47,49,49
7700000000011760013
49áâà1,51áâà1,51áâà2,51áâà3,51áâà4
7700000000011760014
51áâà5,51áâà6,51áâà7,51áâà8,51áâà9
7700000000011760015
51áâà10,51áâà11,51áâà12,51áâà13
7700000000011760016
51áâà14,51áâà15,51áâà18,51áâà19
7700000000011760017
51áâà20,51áâà22,51áâà23,51áâà24
7700000000011760018
51áâà25,51áâà26,51áâà28,51áâà29
7700000000011760019
51áâà30,51áâà33,51áâà34,51áâà37
7700000000011760020
51áâà38,51áâà39,51áâà41,51áâà42
7700000000011760021
51áâà44,51áâà45,51áâà46,51áâà47
7700000000011760022
2ª1,2ª1áâà1,2ª2,2ª2áâà1,2ª3,2ª3áâà1,2
7700000000011760023
4ª1,4ª2,4ª2áâà1,4ª3,6ª1,6ª2,8,8ª1,8ª2
7700000000011760024
8ª3,8ª4,8,8,10ª1,10ª2,10ª2áâà1,10ª3
7700000000011760025
10,12,14
7700000000011760026
1,1áâà2,3áâà1,11,11áâà1,11áâà2,11,15
7700000000011760027
15áâà2,15áâà3,15áâà4,15
7700000000011760028
1,1,2,2áâà1,3áâà1,3áâà2,3áâà3,3áâà4
7700000000011770001
3áâà5,3áâà6,3áâà7,3áâà8,3áâà9,3áâà12
7700000000011770002
3áâà13,3áâà14,3áâà15,3áâà38,4,4áâà
7700000000011770003
5áâà1,5áâà2,5áâà6,6,6áâà2,7áâà3,7áâà4
7700000000011770004
7áâà5,7áâà9,7áâà10,8,8áâà4,9áâà1,10
7700000000011770005
10áâà2,11áâà1,11áâà2,11áâà3,11áâà4
7700000000011770006
11áâà11,11áâà14,11áâà18,11áâà19
7700000000011770007
11áâà26,11áâà27,11áâà28
7700000000011770008
7áâà6,7áâà8,9,10/28,14,17/1,17/1áâà2,24
7700000000011780001
3,3áâà2,3
7700000000011790001
22,23áâà1,23áâà2,23áâà6,24,26,30áâà1
7700000000011800001
30áâà2,30áâà3,30áâà5,30áâà9,30áâà10
7700000000011800002
3/5,3/5áâà2,6áâà1,6áâà2,6áâà3,7,8/14
7700000000011800003
9,10,13,15
7700000000011800004
1/2,3,3áâà2,7áâà1,7áâà2,7áâà3,7áâà4
7700000000011820001
7áâà5,7áâà6,7áâà7,7áâà8,7áâà9,7áâà10
7700000000011820002
7áâà11,7áâà12,7áâà13,7áâà14,7áâà15
7700000000011820003
7700000000011820004
7áâà21,7áâà22,7áâà23,7áâà24,7áâà31
7700000000011820005
7áâà34,7,7áâà2,7áâà3,7áâà5,7áâà6
7700000000011820006
7,11,11áâà2,11áâà3,11áâà4,11,13/17ª1
7700000000011820007
13/17ª2,13/17ª2áâà2,13/17ª3,13/17ª4
7700000000011820008
13/17ª5,13/17ª5áâà2,17ª3,19áâà1
7700000000011820009
7700000000011830001
1áâà7,1áâà8,1ª3,1ª6,3,3áâà4,5,5áâà2
7700000000011830002
5áâà3,5,5áâà3,5áâà4,5áâà5,5áâà6
7700000000011830003
5áâà7,6,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000011830004
7áâà6,7áâà8,7áâà9,7áâà10,7áâà11,7áâà12
7700000000011830005
7áâà13,8,9,10,10áâà2,11,11áâà9,11áâà10
7700000000011830006
11,11áâà2,11áâà3,11áâà4,11áâà5
7700000000011830007
11áâà6,11áâà7,11áâà8,11áâà9
7700000000011830008
11áâà10,11áâà12,11áâà13,11áâà14
7700000000011830009
11áâà15,11áâà16,11áâà17,11áâà18
7700000000011830010
11áâà20,11áâà21,11áâà22,12,12áâà2
7700000000011830011
13,13áâà2,14ª1,14ª2,14ª3,14ª4,14ª5
7700000000011830012
14ª6,15,15áâà2,15áâà3,15,15áâà2
7700000000011830013
15áâà4,15,16,17,18,18áâà2,18ª1,20
7700000000011830014
20áâà2,20áâà3,20áâà5,20áâà6,20áâà7
7700000000011830015
20áâà8,20áâà9,20áâà10,20áâà11,20áâà12
7700000000011830016
20áâà15,20áâà16,20áâà17,20áâà18
7700000000011830017
7700000000011830018
20áâà23,20áâà24,20áâà25,20áâà26
7700000000011830019
20áâà27,20áâà28,20áâà29,20áâà30
7700000000011830020
20áâà31,20áâà32,20áâà33,20áâà34,22áâà1
7700000000011830021
22áâà2,22áâà3,22áâà4,22áâà5,22áâà6
7700000000011830022
22áâà7,22áâà8,22áâà9,22áâà10,22áâà11
7700000000011830023
22áâà12,22áâà13,22áâà14,24,24áâà2
7700000000011830024
7700000000011830025
24áâà8,24áâà9,24áâà10,24áâà11
7700000000011830026
7700000000011840001
3áâà1,3áâà2,7áâà1,7áâà2,7áâà3,7áâà4
7700000000011850001
7áâà5,7áâà6,7áâà7
7700000000011850002
2_áâà1,2_áâà2,2_áâà3
7700000000011860001
14,37áâà1,37áâà2
7700000000011880001
19,19áâà2,19ª1
7700000000011880002
1áâà1,1áâà4,1áâà5,2,3,5,7,7áâà1,8/1,15
7700000000011890001
7700000000011900001
1,4,8,9áâà1,9áâà2,10ª1
7700000000011940001
28áâà1
7700000000011940002
20ª1,20ª2
7700000000011960001
1áâà1,1,3áâà4,4,4áâà5,4ª3,4ª4,4,6ª1
7700000000011960002
6ª1áâà1,6ª1áâà2,6ª2,8,8áâà1,10áâà1
7700000000011960003
7700000000011960004
10áâà7,10áâà8,10áâà9,11,14,16,16ª1áâà1
7700000000011960005
16ª2,16ª2áâà2,18,18áâà2,18áâà3
7700000000011960006
2,2,4áâà1,4áâà3,4áâà5,4,4,4
7700000000011970001
117525
6áâà2,8,8áâà2,8áâà3,10,10áâà2,12
7700000000011970002
12áâà8,12áâà11,12áâà12,12áâà13,12áâà14
7700000000011970003
12,12,12ª,12áâà1,12áâà2,12áâà3
7700000000011970005
12áâà4,12áâà5,12áâà6,12áâà7
7700000000011970006
12áâà8,12áâà9,12áâà10,12áâà11
7700000000011970007
12áâà13,12áâà14,12áâà15
7700000000011970008
1,3ª1,3ª1áâà2,3ª1áâà3,3ª2,3ª3,3ª4
7700000000011970009
3ª4áâà3,3ª5,3ª5,5ª1,5ª1áâà1,5ª2
7700000000011970010
5ª2áâà2,5ª2áâà4,5ª3,5ª4,5ª4áâà2,5ª5,5
7700000000011970011
7ª1,7ª2,9/22,11,13,14,14áâà1,14áâà2
7700000000011970012
14áâà3,14áâà4,14áâà5,14áâà6,14áâà7
7700000000011970013
7700000000011970014
14,14,15,17,19ª1,19ª2,21,21áâà2
7700000000011970015
21áâà3,23ª1,23ª2,23ª3,23,25,25áâà2
7700000000011970016
25áâà3,25ª1,25ª2,25ª2áâà2,25,27ª1
7700000000011970017
27ª1áâà2,27,27áâà2,29,29áâà2,29,31
7700000000011970018
16ª5,16ª8,16,16,16,18ª1,18,18,20
7700000000011970020
117570
16ª1,16ª2,16ª2áâà2,16ª2áâà3,16ª3,16ª4
7700000000011970021
20áâà3,20ª2,33,33áâà2,33,35ª1
7700000000011970022
35ª1áâà3,35ª2,37ª1,37ª1áâà3,37ª2
7700000000011970023
37ª2áâà1,39,39áâà2,39áâà3
7700000000011970025
7700000000011970004
1,1áâà2,1áâà3
7700000000011970026
1,3,3áâà2,4,4áâà1,4áâà2,4áâà2
7700000000011980001
4áâà3,4áâà4,4áâà4,4áâà5,4áâà5
7700000000011980002
4áâà6,4áâà6,4áâà7,4áâà18,4áâà31
7700000000011980003
4áâà31,4áâà31,4áâà31,4áâà40,5
7700000000011980004
5áâà1,7,7áâà1,7áâà2,7áâà3,7áâà4,7
7700000000011980005
12,20,20áâà2,20áâà3,28,28áâà1
7700000000011990001
1/64áâà1
7700000000011990002
1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà6,1
7700000000012000001
1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà8
7700000000012000002
2áâà1,2áâà2,2áâà3,2áâà1,2áâà2
7700000000012000003
2áâà3,2áâà4,2,3áâà1,3áâà2,3áâà3
7700000000012000004
3áâà4,6áâà1,6áâà2,6áâà3,6áâà5,7/12áâà3
7700000000012000005
7,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5,8áâà6
7700000000012000006
8áâà7,8áâà8,8áâà9,8áâà10,8áâà16,8áâà1
7700000000012000007
7700000000012000008
9/11,11,11,14,14,15/21,16ª1,16ª1áâà2
7700000000012000009
16ª2,17,18,18,18áâà1,18áâà1,18áâà2
7700000000012000010
18áâà3,19,19,20,20,21,21ª,21ª
7700000000012000011
20/25,25,25ª1,25ª2,27,27,27áâà1
7700000000012000012
127322
27áâà2,29/16
7700000000012000013
3,4,5,5áâà2,5áâà3,5,6,6áâà1,6áâà2,7ª3
7700000000012010001
7/1,7/1áâà3,8,8áâà3,8áâà4,9/2,10áâà3
7700000000012010002
10áâà4,10áâà5,11_13,12,14ª2,15,15/17
7700000000012010003
16áâà3,16ª1,16ª2,16ª3,19,21,23,25
7700000000012010004
9,9áâà1,9áâà11,15áâà4,15/7,19áâà6
7700000000012040001
4/2,8,8áâà2,8áâà3
7700000000012040002
5/9,5/9áâà2
7700000000012050001
3/5áâà1,3/5áâà2
7700000000012060001
1áâà50,1/9áâà1,1/9áâà7,1/9áâà8,1/9áâà9
7700000000012070001
1/9áâà10,1/9áâà11,1/9áâà12,1/9áâà13
7700000000012070002
1/9áâà14,1/9áâà15,1/9áâà16,1/9áâà17
7700000000012070003
1/9áâà18,1/9áâà21,1/9áâà22,1/9áâà22
7700000000012070004
1/9áâà23,1/9áâà23,1/9áâà24,1/9áâà33
7700000000012070005
1/9áâà38,1/9áâà42,1/9áâà43,1/9áâà44
7700000000012070006
1/9áâà45,1/9áâà52,1/9áâà55,1/9áâà56
7700000000012070007
2/10,4,6,8
7700000000012070008
1/28,2,3,4/7,5/9,5/9áâà1,6/6ª8,7/8,8,9
7700000000012080001
119048
10áâà1,10áâà2,10áâà3,10áâà4,11áâà3
7700000000012080002
11ª1,11ª2,12,12ª2,13,13áâà2,14,15áâà1
7700000000012080003
15áâà1,15áâà2,17,17áâà3
7700000000012080004
1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,3,4,4ª1
7700000000012090001
119590
6,6áâà1,6áâà7,8,8ª1,8ª1áâà3,8ª2,8ª3,10
7700000000012090002
12,12ª1,12ª2,12ª3,12ª3áâà1,12ª3áâà2,12
7700000000012090003
2,2áâà1,3ª1,3ª2,3ª2áâà1,3ª2áâà2,4
7700000000012100001
4áâà1,4áâà2,4,4áâà1,4áâà2,4áâà3
7700000000012100002
4áâà4,5,5ª1,6,7,7ª1,8áâà1,8áâà2,8áâà3
7700000000012100003
8áâà4,8áâà5,9ª1,9ª2,10áâà1,10áâà2
7700000000012100004
7700000000012100005
10áâà8,10áâà10,10áâà11,10áâà14,10áâà15
7700000000012100006
10áâà16,10áâà17,10áâà19,10áâà20
7700000000012100007
7700000000012100008
10áâà25,10áâà26,10áâà28,10áâà30
7700000000012100009
10áâà32,10áâà34,10áâà36,10áâà37
7700000000012100010
10áâà39,10áâà40,10áâà41,10áâà42
7700000000012100011
10áâà44,10áâà45,10áâà47,10áâà49
7700000000012100012
10áâà50,10áâà52,10áâà54,10áâà59
7700000000012100013
10áâà60,10áâà61,10áâà62,11áâà1,11áâà2
7700000000012100014
12,12áâà1,12áâà2,12áâà3,12,15áâà1
7700000000012100015
15áâà2,15áâà3,15áâà4,15áâà5,15áâà8
7700000000012100016
15áâà9,15áâà26,15áâà27,15áâà28,15áâà29
7700000000012100017
15áâà30,15áâà31,15áâà1,15áâà2
7700000000012100018
15áâà3,15áâà4,15áâà5,15áâà6
7700000000012100019
15áâà7,15áâà10,15áâà11,15áâà12
7700000000012100020
7700000000012100021
7700000000012100022
15áâà21,15áâà22,15áâà23,15áâà24
7700000000012100023
15áâà25,16áâà1,16áâà2,16áâà3,16áâà4
7700000000012100024
16áâà5,16ª1,16ª1áâà1,16ª1áâà2,16ª1áâà3
7700000000012100025
16ª1áâà4,16ª1áâà5,16ª1áâà6,16ª1áâà8
7700000000012100026
16ª1áâà10,16ª1áâà15,16ª2,16ª2áâà1
7700000000012100027
16ª2áâà2,16ª2áâà3,16ª2áâà4,16ª2áâà5
7700000000012100028
16ª2áâà6,16ª2áâà7,16ª2áâà8,16ª2áâà9
7700000000012100029
16ª2áâà10,16ª2áâà11,16ª4áâà1,16ª4áâà2
7700000000012100030
16ª4áâà3,16ª4áâà4,16áâà1,17áâà1
7700000000012100031
17áâà3,17áâà4,18áâà1,18áâà2,18áâà3
7700000000012100032
18ª1,18ª1áâà1
7700000000012100033
1áâà5,1ª1,1ª2,1ª3,1ª4,1ª4áâà1,2,5,12
7700000000012110001
12ª2áâà1,12ª2áâà2,12ª2áâà6,12ª2áâà7
7700000000012110002
12ª2áâà8,12ª3,14,16áâà1
7700000000012110003
3,5,6ª1,6ª2,6ª3,7,8áâà1,8áâà3,8áâà4
7700000000012120001
8ª1,8ª2,9,10,10,11,11,11áâà2,12
7700000000012120002
13ª1,13ª2,13,13áâà2
7700000000012120003
1ª1,1ª2,1ª3,1ª4,1ª5,2,3,3áâà1,3
7700000000012150001
4áâà1,4áâà2,4áâà3,4áâà4,4áâà5,4áâà7,6
7700000000012150002
12áâà1,12ª1,12ª2,14,14ª1,15,16,16áâà1
7700000000012160001
16áâà2,17,18,18áâà1,19,21,21áâà1,23,25
7700000000012160002
25áâà1,25áâà2,25áâà3,27
7700000000012160003
20,20áâà1,20ª1,20ª1áâà2,22,22ª1
7700000000012160004
125459
22ª1áâà1,24,24áâà1,26,28,30,32,32áâà1
7700000000012160005
34,34áâà2,36,38
7700000000012160006
20,20áâà2,22,24,26áâà1,26áâà2,26áâà3
7700000000012180001
7700000000012180002
43áâà3,43áâà4,43áâà5,43áâà7,43áâà8
7700000000012180005
43áâà10,43áâà11,43áâà12,43áâà13
7700000000012180006
43áâà14,43áâà15,43áâà17,43áâà18
7700000000012180007
43áâà19,43áâà25,43áâà27,43áâà28
7700000000012180008
10áâà2,11áâà2,11ª1,12áâà1,12áâà2
7700000000012180009
26áâà9,28,30,30áâà2,31,33,33ª1,35,37
7700000000012180003
1,1áâà2,3,4áâà1,4áâà2,4áâà3,5,5áâà2
7700000000012180010
6áâà1,6áâà2,7áâà1,7áâà3,8,8ª2,9,10
7700000000012180011
12áâà3,13,14ª1,14ª2,14ª3,15,16,17
7700000000012180012
18/7áâà1,18/7áâà2,18/7áâà3,19,19áâà2
7700000000012180013
21,21áâà2,21ª2,23,25áâà1,25áâà2,27ª1
7700000000012180014
27ª2,27ª3,29áâà2,29/9áâà1
7700000000012180015
37ª3,39,39áâà4,39áâà5,43,43áâà1,43áâà2
7700000000012180004
1áâà2,1áâà3,1áâà4,1áâà5,1áâà7,1áâà8
7700000000012190001
1áâà10,1áâà11,1áâà12,1áâà13,1áâà14
7700000000012190002
1áâà15,1áâà18,1áâà19,1áâà25,2,4
7700000000012190003
18áâà1,18áâà2
7700000000012190004
5ª1,5ª1áâà2,5ª1áâà3,7,9,9áâà3,9áâà4,9
7700000000012200001
7700000000012200002
4áâà7,4áâà8,4áâà9,6,6ª1,8,8áâà2,8áâà3
7700000000012200003
8áâà4,8áâà7,10,10áâà2,10áâà3,10áâà4
7700000000012200004
7700000000012200005
10áâà10
7700000000012200006
2,15,15áâà1,15áâà2,15áâà3,15áâà4
7700000000012220001
7700000000012220002
15áâà11,15áâà13,15áâà14,15áâà16
7700000000012220003
15áâà24,15áâà42,19,19áâà2,19áâà3
7700000000012220004
21ª4áâà2,21ª5,21ª7,21ª7,21ª8,21ª9
7700000000012220005
21áâà14,21áâà16,21ª1,21ª2,21ª3,21ª4
7700000000012220006
21ª15áâà4,21,21áâà2,21áâà3,21áâà4
7700000000012220007
21ª10,21ª11,21ª11,21ª12,21ª13,21ª13
7700000000012220008
21ª14,21ª14,21ª15áâà2,21ª15áâà3
7700000000012220009
21ª29,21ª29áâà2,21áâà10,21áâà18
7700000000012220010
7700000000012220011
21áâà9,21áâà10,21áâà11,21áâà13
7700000000012220012
21áâà14,21áâà15,21áâà17,21áâà18
7700000000012220013
21áâà19,21áâà20,21áâà21,21áâà22
7700000000012220014
21áâà25,21áâà26,21áâà27,21áâà28
7700000000012220015
21áâà21,21áâà25,21áâà43,23,23áâà1
7700000000012220016
23áâà2,23áâà3,23áâà4
7700000000012220017
3,5ª2,7ª1,7ª2,9ª1,9ª1áâà2,9ª2,11,13,14
7700000000012230001
7700000000012230002
7700000000012230003
14áâà13,14áâà14,14áâà15,14áâà16
7700000000012230004
14áâà17,14áâà18,14áâà19,14áâà20
7700000000012230005
14áâà29,14áâà30,14áâà31,14áâà38
7700000000012230006
14áâà40,14áâà41,14ª1,18/2,19,23
7700000000012230007
7700000000012240001
7700000000012250001
1,1áâà2,1,3,4,4áâà3,5,5ª2,6,8,8,10
7700000000012260001
10áâà2,10áâà4,10ª2,12,12_,14,14ª1
7700000000012260002
14ª2,14ª2áâà2,14
7700000000012260004
7,9,9ª2,9,9áâà5,11
7700000000012260005
121151
7700000000012260003
121248
36,47
7700000000012270001
21,21áâà1,21áâà2,21áâà3,21áâà4,21áâà5
7700000000012280001
21áâà6,21áâà7
7700000000012280002
54ª4,54ª4áâà1,54ª4áâà2,54ª4áâà3
7700000000012280003
54ª4áâà4,54ª4áâà5,54ª4áâà7,54ª4áâà8
7700000000012280004
54ª4áâà9,54ª4áâà11,54ª4áâà12,54ª4áâà15
7700000000012280005
54ª4áâà16,54ª4áâà18,54ª4áâà19
7700000000012280006
54ª4áâà20,54ª4áâà21,54ª4áâà22
7700000000012280007
54ª4áâà24,54ª4áâà25,54ª4áâà26
7700000000012280008
54ª4áâà27,54ª4áâà28,54ª4áâà30,54ª5
7700000000012280009
54ª5áâà2,54ª5áâà3,54,54áâà2,54áâà3
7700000000012280010
54áâà4,54áâà5,54áâà6,56,56áâà4,56ª1
7700000000012280011
56ª2,56ª3,56ª4,56_58áâà7,56,56,58
7700000000012280012
58ª2,58ª2áâà2,58ª3áâà4,58ª3áâà15,58ª4
7700000000012280013
10áâà5,10áâà6,10áâà7,10áâà8
7700000000012280014
10áâà9,10áâà10,10áâà11,10áâà12
7700000000012280015
10áâà13,10áâà14,10áâà15,10áâà16
7700000000012280016
10áâà18,10áâà21,10áâà22,10áâà23,12
7700000000012280017
58,60,60áâà4,60áâà5,60áâà7,60áâà8
7700000000012280018
60áâà9,60áâà10,60áâà15,60áâà18,60áâà19
7700000000012280019
60áâà22,60áâà24,60ª1,60ª2,60ª3
7700000000012280020
7,7ª1,7ª1áâà2,7ª1áâà3,7ª2,7ª2áâà2
7700000000012280021
7ª2áâà3,7ª3,7ª4,9,9áâà1,9ª1,9ª1áâà2,9
7700000000012280022
9áâà1,9áâà3,9áâà4,9áâà5,9áâà6
7700000000012280023
9áâà7,9áâà10,9áâà14,9,9,11,11áâà1
7700000000012280024
7700000000012280025
13áâà1,13áâà2,13áâà3,15,20áâà1
7700000000012280026
20ª1,20ª3,20ª3áâà2,20,20áâà2,21
7700000000012280027
21áâà2,21áâà3,21áâà4,21áâà5
7700000000012280028
21áâà6,22,22,23,23áâà2,23áâà3
7700000000012280029
23áâà4,23áâà5,23ª2,23ª4,24ª1,24ª1áâà2
7700000000012280030
24ª1áâà3,24ª1áâà5,24ª1áâà6,24ª2
7700000000012280031
24ª2áâà2,24ª3,24ª3áâà2,24ª3áâà3
7700000000012280032
24ª3áâà4,25,25áâà2,25áâà3,25áâà4
7700000000012280033
7700000000012280034
25áâà10,26,26áâà2,26ª2,26ª3,26ª4
7700000000012280035
27áâà1,27áâà2,27áâà3,27,27áâà2
7700000000012280036
27áâà3,27áâà4,28,28ª1,28ª2,29,29áâà1
7700000000012280037
29áâà3,29,30,30ª1,32,32ª1,34ª2
7700000000012280038
60ª3áâà2,60ª4,60,60áâà2
7700000000012280039
62áâà2
7700000000012280040
48,48,48áâà2,48áâà3,48áâà4
7700000000012280041
48áâà5,48áâà6,48áâà7,48,50ª1
7700000000012280042
50ª1áâà12,50ª1áâà13,50ª1áâà14
7700000000012280043
12áâà1,12áâà3,12áâà4,12áâà6,12áâà7
7700000000012280044
12áâà8,12áâà9,12áâà10,12áâà11,12áâà13
7700000000012280045
12áâà14
7700000000012280046
34ª2áâà1,34ª2áâà2,40,42,44,44áâà2
7700000000012280047
50ª1áâà15,50ª1áâà16,52,52áâà2,52áâà3,62
7700000000012280048
3ª1áâà4,3ª1áâà5,3ª1áâà6,3ª1áâà7
7700000000012280049
1,1áâà2,1ª1,1ª1áâà2,1ª2,1ª2áâà2
7700000000012280050
1ª2áâà3,1ª2áâà4,1ª3,1ª3áâà2,1ª3,1ª3
7700000000012280051
1ª3áâà2,1ª3áâà4,1ª3áâà5,1ª5áâà1
7700000000012280052
1ª6áâà1,1ª7,1áâà1,1áâà2,1áâà3
7700000000012280053
1áâà4,1áâà5,1áâà6,1áâà7,1áâà8
7700000000012280054
1áâà9,1áâà11,6,6áâà7,6áâà8,6áâà9
7700000000012280055
6áâà10
7700000000012280056
1áâà10,1áâà19,3,3ª1,3ª1áâà2,3ª1áâà3
7700000000012280057
3ª1áâà8,3ª1áâà9,3ª2,3ª2áâà1,3ª2áâà2
7700000000012280058
3ª2áâà3,3ª2áâà4,3ª3,3ª3áâà2,3ª3áâà3
7700000000012280059
3ª3áâà4,3ª3áâà5,3ª3áâà6,3ª3áâà7
7700000000012280060
3ª3áâà1,3ª3áâà2,3ª3áâà3,3ª3áâà4
7700000000012280061
3ª3áâà5,3ª3áâà6,3ª4,3ª5,3ª5áâà2
7700000000012280062
3ª5,3ª5áâà1,3ª5áâà3,3ª5áâà4
7700000000012280063
3ª5áâà7,3ª5áâà8,3ª5,3ª5áâà2
7700000000012280064
3ª5áâà3,3ª6,3ª6áâà2,3ª8áâà1,3ª8áâà2
7700000000012280065
3ª8áâà3,3ª8áâà4,3ª8áâà5,3ª8áâà6
7700000000012280066
3ª8áâà7,3ª9,3ª9áâà1,3ª9áâà2,3ª9áâà3
7700000000012280067
3ª9áâà4,3ª9áâà5,3ª10,3ª10áâà1,3ª11
7700000000012280068
3ª11áâà2,3ª12áâà1,3ª12áâà2,3ª12áâà3
7700000000012280069
3ª12áâà4,3ª12áâà5,3ª12áâà7,3ª13
7700000000012280070
3ª13áâà1,3ª13áâà2,3ª14,3ª14áâà2,3ª16
7700000000012280071
3ª19,3ª19áâà1,3ª19áâà3,3ª19áâà4
7700000000012280072
3ª19áâà5,3ª19áâà6,3ª19áâà7,3ª19áâà8
7700000000012280073
3ª19áâà15,3ª20,3ª20áâà2,3ª20áâà3
7700000000012280074
3ª20áâà4,3ª20áâà5,3áâà9,3áâà10
7700000000012280075
3áâà11,8,8áâà2,8áâà3,8áâà4,8áâà6
7700000000012280076
8áâà7,8áâà9,8áâà11,8áâà12,8áâà13
7700000000012280077
8áâà15,8ª1,8ª1áâà2,8ª1áâà3,8ª1áâà4
7700000000012280078
5ª1,5ª1áâà2,5ª1áâà3,5ª2áâà2,14ª1,16ª2
7700000000012280080
16ª2áâà2,16ª3,18ª1,18
7700000000012280081
1,1áâà2,1áâà3,1áâà4,1áâà5,1ª1,1ª1áâà2
7700000000012290001
1,1,3,3áâà2,3áâà3,3áâà4,3,3áâà3
7700000000012290002
3áâà4,3áâà5,3áâà7,3,3áâà2,3áâà3
7700000000012290003
3áâà5,3,4áâà1,4áâà2,4áâà3,4áâà4
7700000000012290004
4áâà5,5,5ª2,5ª2áâà1,5ª2áâà3,5ª2áâà4,5
7700000000012290005
5áâà2,5áâà3,5,6,6áâà3,6áâà4,6áâà5
7700000000012290006
6áâà6,6áâà7,6áâà8,6áâà1,6áâà2,6áâà3
7700000000012290007
6áâà5,7,7áâà1,7áâà3,7áâà4,7áâà5,7áâà6
7700000000012290008
7áâà7,7áâà9,7áâà11,7áâà13,8,9,9áâà2
7700000000012290009
9áâà3,9áâà4
7700000000012290010
1,1áâà2,1áâà3,3,4ª1,4ª1áâà3,4ª2,5ª1
7700000000012300001
5ª1áâà2,5ª2,5ª2áâà3,6ª1,6ª1áâà2,6ª2,6
7700000000012300002
6,7ª1,7ª2,7ª2áâà2,8ª1,8ª2,9ª1,9ª1áâà2
7700000000012300003
9,10ª1,10ª1áâà2,10ª1áâà3,10ª2
7700000000012300004
7700000000012310001
119530
14áâà6,14áâà7,14áâà8,14áâà9,14áâà10
7700000000012310002
14áâà11,14áâà12,14áâà13,14áâà14
7700000000012310003
14áâà15,14áâà16,14,14,15,15áâà1
7700000000012310005
15áâà2,15áâà3,15áâà4,15áâà5,15áâà6,16
7700000000012310006
7700000000012310007
7700000000012310008
16áâà12,16áâà13,16áâà14,16áâà15
7700000000012310009
16áâà16,16áâà17,16áâà18,16áâà19
7700000000012310010
16áâà20,16áâà21,16áâà22,16áâà23
7700000000012310011
16áâà24,16áâà25,16áâà26,16áâà27
7700000000012310012
16áâà28,16áâà29,16áâà30,16áâà31
7700000000012310013
16áâà32,16áâà33,16áâà34,16áâà35
7700000000012310014
16áâà36,16áâà37,16áâà38,16áâà39
7700000000012310015
16áâà40,16áâà41,16áâà42,16áâà43
7700000000012310016
16áâà44,16áâà45,16áâà50,16áâà51
7700000000012310017
16áâà52,16áâà53,16áâà54,16áâà55
7700000000012310018
16áâà56,16áâà57,16áâà58,16áâà59
7700000000012310019
16áâà60,16áâà61,16áâà62,16áâà63
7700000000012310020
16áâà64,16áâà65,16áâà66,16áâà67
7700000000012310021
16áâà68,16áâà69,16áâà70,16áâà71
7700000000012310022
16áâà72,16áâà73,16áâà74,16áâà75
7700000000012310023
16áâà1,16áâà2,16áâà3,16áâà4
7700000000012310024
7700000000012310025
16áâà11,16áâà12,16áâà46,16áâà47
7700000000012310026
16áâà48,16áâà49,18áâà,18áâà,18áâà1
7700000000012310027
18áâà1,18áâà2,18áâà3,18áâà4,18áâà5
7700000000012310028
7700000000012310029
20áâà1,20áâà3,20áâà4,20áâà5,22áâà
7700000000012310030
7700000000012310031
7700000000012310032
7700000000012310033
2áâà9
7700000000012310034
1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà6,5
7700000000012310035
7700000000012310036
5áâà8,5áâà9,5áâà10,5áâà11,6,6áâà1
7700000000012310037
6áâà2,6áâà3,6áâà4,6áâà5,6áâà6,6áâà8
7700000000012310038
22áâà11,24áâà,24áâà1,24áâà2
7700000000012310039
6áâà10,6áâà12,6áâà13,6áâà14,6áâà15
7700000000012310040
6áâà16,6áâà18,6áâà19,6áâà20,6áâà21
7700000000012310041
6áâà22,6áâà25,6áâà26,6áâà27,6áâà28
7700000000012310042
6áâà32,6áâà34,6áâà35,6áâà37,6,6áâà1
7700000000012310043
6áâà2,6áâà3,6áâà4,6áâà5,6áâà7
7700000000012310044
6áâà8,6áâà9,6áâà10,10áâà1,10áâà2
7700000000012310045
7700000000012310046
10áâà8,11,12áâà1,12áâà2,12áâà3,12áâà4
7700000000012310047
12áâà5,12áâà6,12áâà7,12áâà8,12áâà9,13
7700000000012310048
17,17áâà,17áâà1,17áâà2,27
7700000000012310049
4áâà4,4áâà15,4áâà16,4áâà24,10áâà1
7700000000012310050
2,2áâà2,2áâà3,2áâà4,8
7700000000012310004
10áâà2,10áâà3,10áâà4,10áâà5
7700000000012310051
10áâà6,10áâà7,10áâà8,10áâà9
7700000000012310052
10áâà10,10áâà11,10áâà1,10áâà2
7700000000012310053
10áâà1,10áâà2,10áâà3,10áâà4
7700000000012310054
10áâà5,10,10áâà1
7700000000012310055
4,6ª1,7ª1,8ª1,9ª1,10ª1,11ª1,12,12,40
7700000000012320001
7700000000012320002
7700000000012330001
125364
2áâà6,2/4,2/4áâà1,2/4áâà2,2/4áâà3,3
7700000000012330002
3áâà1,4ª1,5,6,7,7áâà1,7áâà5,8ª1,8ª2
7700000000012330003
7700000000012330004
7700000000012330005
16ª1,16ª1áâà1,16ª2áâà1
7700000000012330006
7700000000012340001
2,2ª1,2ª1áâà1,3áâà1,3áâà5,3áâà9,4áâà1
7700000000012350001
4áâà2,4áâà3,4áâà4,4áâà5,4áâà6,4áâà7
7700000000012350002
4áâà8,4áâà10,5áâà1,5áâà2,5áâà7,5áâà10
7700000000012350003
4áâà1,6,7/9áâà1,8áâà1,8áâà2,9,9áâà1
7700000000012360001
9áâà3,10,10áâà1,11áâà1,12áâà3,12
7700000000012360002
13/7áâà1,13/7áâà2,13/7áâà3,14áâà3
7700000000012360003
17áâà1,17áâà2,18,18áâà3,19,20áâà1
7700000000012360004
2/19,2/19áâà5,2/19áâà9,2/19áâà10,4
7700000000012370001
119330
4áâà1,4ª1,4ª2,4ª3,6ª1,6ª2,6ª8,6ª9,8
7700000000012370002
10/32,10/32áâà1,10,10
7700000000012370003
9áâà2,11/2,11,11áâà3,13,15,18áâà1
7700000000012390001
18áâà2,18áâà4,18áâà5,18áâà6,18áâà13
7700000000012390002
30áâà1
7700000000012390003
2,2áâà2,6áâà1,6áâà2,7,7áâà8,9áâà1
7700000000012400001
9áâà2,11áâà1,11áâà2,11áâà5,11/17áâà3
7700000000012400002
17,17áâà1,17áâà2,17áâà3,17áâà8,17áâà9
7700000000012400003
17áâà10,17áâà11,17áâà13,17áâà15,17,19
7700000000012400004
20áâà1,20áâà2,20áâà3,25áâà1,25áâà2
7700000000012400005
7700000000012400006
27áâà7,27áâà8,27áâà9,27áâà11,27áâà12
7700000000012400007
27áâà13,27áâà14,31áâà1,31áâà2,31,33
7700000000012400008
33áâà1,33áâà2,33áâà3,33áâà5,33áâà1
7700000000012400009
33áâà2,33áâà3,33,33áâà1,33áâà2
7700000000012400010
33áâà3,35,37áâà1,37áâà17,39_41áâà2
7700000000012400011
39_41áâà17,40,40áâà2,41áâà1,41áâà2
7700000000012400012
7700000000012400013
41áâà9,41áâà10,41áâà11,41áâà19,42
7700000000012400014
42áâà2,43,45,66/30áâà1,68,68áâà2
7700000000012400015
68áâà3,68áâà4,68áâà6,68áâà11,68áâà13
7700000000012400016
51,53,53áâà5,53áâà6,53áâà7,53áâà13
7700000000012400017
53áâà21,55,55áâà1,55áâà2,55ª1,55ª1áâà2
7700000000012400018
57,57áâà1,57áâà2,57áâà3,57áâà4,57áâà5
7700000000012400019
57áâà6,57áâà7,57áâà8,57áâà9,57ª2,57ª3
7700000000012400020
57ª4,57ª5,59,59áâà1,59áâà2,59áâà3
7700000000012400021
59áâà4,59ª2,59ª2áâà1,59ª2áâà14,59,61
7700000000012400022
61áâà2,63áâà1,63áâà2,63áâà3,63áâà4
7700000000012400023
63áâà5,63áâà6,63áâà7,63áâà8,63áâà9
7700000000012400024
63áâà10,63áâà11,63áâà12,63áâà13
7700000000012400025
63áâà14,63áâà15,63áâà16,63áâà22,65áâà1
7700000000012400026
65áâà2,65áâà3,65áâà4,65áâà5,65áâà6
7700000000012400027
65áâà7,65áâà8,65ª1,65ª2,65ª3,67áâà1
7700000000012400028
67áâà2,67ª1,67ª2,69,69áâà2,69áâà3
7700000000012400029
69ª30,69ª74,69ª75,71,71áâà2,71áâà3
7700000000012400030
71áâà4,71áâà5,71áâà6,71áâà7,71áâà9
7700000000012400031
71áâà10,71áâà11,71áâà12,71áâà14
7700000000012400032
71áâà15,71áâà16,71áâà19,71áâà20
7700000000012400033
71áâà21,71,71áâà2,71áâà3
7700000000012400034
84,86,88,90,94,94áâà2,94áâà3,94áâà3
7700000000012400035
94áâà5,94áâà7,96,98,98áâà2,98áâà3
7700000000012400036
98áâà4
7700000000012400037
1,3,7,9,11,13
7700000000012410001
2,2áâà1,2áâà2,2,4,4,4áâà1,6,6áâà2,12
7700000000012410002
26áâà6,26ª1,26ª1áâà1,26ª2,26ª2áâà1
7700000000012420001
26ª2áâà4,26ª2áâà5,26ª3,26ª4,26ª5,26
7700000000012420002
28ª1,28ª2,28ª3,28ª4,30,30áâà2,30ª1
7700000000012420003
30ª2,30ª2áâà1,30ª2áâà2,30,30áâà1,30
7700000000012420004
12ª3áâà2,12ª4,12ª4áâà1,12,12áâà3
7700000000012420006
127540
63ª4áâà3,63ª6,65áâà1,65áâà2,65áâà3
7700000000012420007
65áâà4
7700000000012420008
1,3,3áâà1,3áâà2,5ª1,5ª1áâà3,5ª2
7700000000012420009
5ª2áâà1,7,9,11,11áâà9,27ª1,27ª1áâà1
7700000000012420010
27ª1áâà2,27ª2,27ª2áâà1,29ª1,29ª1áâà1
7700000000012420011
31,31áâà1,33,35,35áâà2,37ª1,37ª1áâà1
7700000000012420012
37ª2,37ª2áâà1,37ª2áâà2,37ª2áâà3
7700000000012420013
37ª2áâà4,39,41,43,43áâà2,45ª1,45ª1áâà2
7700000000012420014
45ª1áâà3,47áâà1,47ª1,47ª1áâà2,49,51
7700000000012420015
53ª1,53ª2,53ª2áâà1,53ª2áâà2,53ª2áâà3
7700000000012420016
53ª3,53ª3áâà1,59,61,61áâà2
7700000000012420017
13,15ª1,15ª1áâà1,15ª1áâà2,15ª2,17ª1
7700000000012420018
17ª2,19,21,23
7700000000012420019
4ª1áâà2
7700000000012420005
2ª1,2ª2,2ª3,2ª4,2ª5,2ª6,2ª7,2ª7áâà1
7700000000012420020
2áâà1,2áâà2,2áâà3,2áâà4,4áâà2,4ª1
7700000000012420021
4ª1áâà1,4ª1áâà3,4ª1áâà4,4ª2,4ª3,4ª4
7700000000012420022
4ª4áâà1,6,6áâà1,6ª1,6ª1áâà1,6ª2,6ª3,6
7700000000012420023
8ª1,8ª1áâà1,8ª1áâà2,8ª1áâà3,8,8
7700000000012420024
10áâà1,10áâà2,10ª1,10ª1áâà2,10ª2
7700000000012420025
10ª2áâà1,10ª2áâà2,10ª3,10ª3áâà1,10ª4
7700000000012420026
10ª5,10,12,12áâà1,12ª1,12ª2,12ª3
7700000000012420027
12áâà1,12áâà2,12áâà3,12áâà5
7700000000012420028
12áâà6,12áâà7,12áâà8,12áâà9
7700000000012420029
12áâà10,12áâà11,12áâà12,12áâà13
7700000000012420030
12áâà14,12áâà15,12áâà16,12áâà18
7700000000012420031
12áâà19,12áâà23,12áâà24,14áâà1,14ª1
7700000000012420032
14ª2,14ª2áâà1,14ª3,14ª3áâà3,14ª4,14ª5
7700000000012420033
14,14áâà2,14,16ª1,16ª1áâà1,16ª1áâà3
7700000000012420034
16ª1áâà4,16ª2,16ª2áâà2,16ª3,16ª3áâà1
7700000000012420035
16ª4,16ª5,16ª6,16ª7,18,18ª1,18ª1áâà1
7700000000012420036
18,18,20ª1,20ª1áâà1,20ª1áâà5,20ª2
7700000000012420037
20ª2áâà1,20ª2áâà2,20ª3,20ª3áâà1,20ª4
7700000000012420038
20ª4áâà2,22áâà2,22áâà3,22ª1,22ª2,22ª3
7700000000012420039
22ª4,22ª5,22ª6,24ª1,24ª2,24ª3,24ª3áâà2
7700000000012420040
24ª4,24ª5,24ª5áâà2
7700000000012420041
79ª21,79ª22,79ª23,79ª24,79áâà1
7700000000012420042
79áâà11,79áâà13,79áâà14,79áâà11,81
7700000000012420043
69ª1,69ª2,69ª2áâà1,69ª3,69ª3áâà3,71ª1
7700000000012420044
32,32ª1,32ª2,32ª3,32ª4,32ª5,32ª5áâà1
7700000000012420045
32ª6,32ª6áâà1,32ª7,32ª7áâà1,32ª8,32ª9
7700000000012420046
34,34áâà1,34áâà3,34ª2,34,36,36ª1,36ª3
7700000000012420047
36ª4,36ª4áâà4,36,38áâà1,38ª1,38ª2
7700000000012420048
38ª3,38áâà1,38áâà2,40ª2,40ª2áâà2
7700000000012420049
40ª3,40ª1,40ª2,40ª3,40ª4,42,42áâà1
7700000000012420050
42áâà2,42áâà3,42áâà4,44ª1,44ª2
7700000000012420051
44ª2áâà2,44,46,46áâà1,46áâà2,46ª1
7700000000012420052
46ª2,48ª1,48ª2,50,50áâà1,50áâà1,52
7700000000012420053
52áâà1,52áâà2,52áâà3,52áâà4,52áâà5
7700000000012420054
73ª1,73ª2,73ª3,73ª3áâà2,73ª4,73ª4áâà1
7700000000012420055
73ª6,73,73,75áâà1,75áâà1,75áâà1
7700000000012420056
75áâà3,75áâà5,75áâà8,75áâà10,75áâà16
7700000000012420057
75áâà17,75áâà18,75,75áâà1,75áâà3
7700000000012420058
75áâà4,75áâà5,75áâà6,75áâà7
7700000000012420059
89áâà1
7700000000012420060
75áâà8,75áâà9,75áâà10,75áâà12
7700000000012420061
75áâà13,75áâà14,75áâà1,75áâà2
7700000000012420062
75áâà3,75áâà4,77,77áâà1,77áâà2
7700000000012420063
77áâà3,77áâà4,79,79áâà1,79áâà4,79áâà8
7700000000012420064
79áâà9,79áâà10,79áâà11,79áâà12,79áâà13
7700000000012420065
79áâà14,79áâà16,79áâà17,79áâà18
7700000000012420066
79áâà19,79áâà19,79áâà21,79áâà24
7700000000012420067
79áâà27,79áâà28,79áâà32,79áâà33
7700000000012420068
79ª8,79ª9,79ª10,79ª12,79ª13,79ª14
7700000000012420069
79ª15,79ª16,79ª17,79ª18,79ª19,79ª20
7700000000012420070
81áâà2,83,83áâà2,83áâà3,83áâà4,83áâà5
7700000000012420071
79áâà2,79áâà3,79áâà4,79áâà5
7700000000012420072
79áâà6,79áâà7,79áâà8,79áâà9
7700000000012420073
83áâà6,83áâà8,83áâà9,83áâà15,83
7700000000012420074
83áâà2,83áâà3,83áâà4,83áâà5
7700000000012420075
83áâà6,83áâà7,83áâà8,83áâà12
7700000000012420076
83áâà13,83áâà14,83áâà15,83áâà16
7700000000012420077
83áâà17,83áâà25,85,85áâà2,85áâà3
7700000000012420078
85áâà4,85áâà5,85áâà6,85áâà7,85áâà8
7700000000012420079
85áâà9,85áâà10,85áâà13,85áâà17,85áâà18
7700000000012420080
85áâà1,87áâà1
7700000000012420081
79áâà1,79áâà2,79áâà3,79áâà4
7700000000012420083
79,79áâà2,79áâà3,79áâà5,79áâà6
7700000000012420084
81,81áâà2,81áâà3,81áâà4,81áâà5
7700000000012420085
81áâà6,81áâà7,81áâà8,81áâà9
7700000000012420086
81áâà10,81áâà11,81áâà12,81áâà13
7700000000012420087
81áâà14,81áâà15,81áâà16,81áâà17
7700000000012420088
81áâà18,81áâà19,81áâà20,81áâà21
7700000000012420089
81áâà22,81áâà25,81áâà26,81áâà27
7700000000012420090
81áâà28,81áâà29,81áâà30,81áâà38
7700000000012420091
81áâà39
7700000000012420092
25áâà4,25áâà10,25ª1áâà1,25ª1áâà2
7700000000012430001
25ª2áâà1,25ª2áâà2,25ª2áâà3,25ª3,25ª4
7700000000012430002
3,4áâà1,5,7,9,11,13
7700000000012440001
1,2,3,4,6,8,8áâà2,10/8,13áâà1,13áâà2
7700000000012450001
7700000000012450002
13áâà8,13áâà9
7700000000012450003
5,7,9/30
7700000000012450004
7700000000012480001
1,1áâà1,2ª1,2ª2,2ª2áâà1,2ª2áâà2
7700000000012490001
2ª2áâà3,3
7700000000012490002
4,5,7,8áâà4,8ª1,8ª2,10
7700000000012500001
121165
1áâà1,1áâà4,3áâà1,3áâà2,3áâà3,5áâà1
7700000000012510001
109028
5áâà2,7áâà1,7áâà2,9,9áâà2,11áâà1,11áâà2
7700000000012510002
2áâà1,2áâà2,3/13,4áâà1,4áâà2,4ª2,5áâà1
7700000000012520001
13/1,18,24áâà1,24áâà3,24ª1,26áâà1
7700000000012520002
26áâà2,26áâà4,26áâà6,32/26áâà6
7700000000012520003
32/26áâà7,32/26áâà8,36,49
7700000000012520004
10,12,12,14,14áâà2,14áâà3,14,16,20ª
7700000000012530001
20ª,20ª2,20ª2áâà2,22,22
7700000000012530002
17,17áâà3,17áâà4,17áâà5,17áâà6,17áâà7
7700000000012530003
17áâà8,17áâà10,17áâà11,17áâà12,17áâà13
7700000000012530004
17áâà14,17áâà15,17áâà16,17áâà17
7700000000012530005
17áâà18,17áâà19,17áâà23,17áâà24
7700000000012530006
17áâà26,17áâà27,17áâà30,17áâà36
7700000000012530007
17áâà37,17,17áâà2,17áâà3,17áâà4
7700000000012530008
1áâà1,1áâà1,2,2ª1,2ª1áâà1,2ª1áâà2,2
7700000000012540001
4,5,5áâà2,5áâà3,5áâà4,6ª1,6ª2,6ª2áâà1
7700000000012540002
6ª3,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000012540003
7áâà6,7áâà7,7áâà8,7áâà9,7áâà10,7áâà12
7700000000012540004
7áâà16,7áâà18,7áâà23,7áâà25,7áâà41
7700000000012540005
7áâà42,7áâà43,7áâà44,7áâà46,7áâà47
7700000000012540006
7áâà48,7áâà51,7áâà54,7áâà55,7áâà66
7700000000012540007
7áâà1,7áâà1,9áâà1,10ª1,10ª1áâà1,12
7700000000012540008
14áâà1,14ª1,14ª1áâà1,14ª2,14ª3,16ª1
7700000000012540009
16ª1áâà2,18ª1,20,22ª1,22ª1áâà2,22ª2
7700000000012540010
22ª2áâà2,22ª3,26ª1,26ª3,28,28áâà2
7700000000012540011
28áâà3,30áâà2,30áâà3,30áâà4,30ª1,30ª2
7700000000012540012
32ª1,34,34,36ª1,36ª1áâà1,36ª3
7700000000012540013
36ª3áâà1,36ª4,36ª4áâà2,38ª1,40,42,44
7700000000012540014
44áâà2,44áâà3,44áâà1
7700000000012540015
1,2,3,4,5ª1,5ª1áâà1,5ª1áâà2,5ª2,10,12
7700000000012560001
áâà1,áâà2,áâà3,áâà4,áâà5,áâà6,áâà8
7700000000012570001
45268560000
áâà9,áâà11,áâà12
7700000000012570002
3áâà1,3áâà2,6áâà1,6áâà3,6áâà4
7700000000012590001
6áâà5,10áâà1,10áâà2,10áâà3,10áâà4
7700000000012590002
10/2áâà3,10/2áâà6,10/2áâà9,12áâà1
7700000000012590003
1,1áâà2,1áâà3,1áâà5,1áâà6,3áâà1,3áâà2
7700000000012630001
4_6áâà2,4_6áâà3,5
7700000000012630002
3,4,5,6,6áâà2,8,8áâà1,8áâà2,10,12áâà4
7700000000012640001
121467
12ª1,12ª2,12ª3,14áâà4,14ª1,14ª2,14ª3
7700000000012640002
14ª3áâà7,14ª3,16,18ª1,18ª2,18ª3
7700000000012640003
7,7áâà3,7ª2,9,9,11ª1,11ª2,11ª2,11ª3
7700000000012640004
121552
11ª3,13,15,15áâà4,15ª2,15ª3,17,19
7700000000012640005
20ª1,20ª1áâà1,20ª2,20ª2áâà1,22ª1,22ª2
7700000000012640006
22ª2áâà2,23,23áâà2,24,26
7700000000012640007
1ª1,1ª2,3áâà2
7700000000012640008
121615
áâà43,21,21áâà2,21ª1áâà1,23,24,24áâà2
7700000000012650001
25,25áâà1,26,26,27,28ª1,28ª1áâà1,28ª2
7700000000012650002
28ª2áâà2,29,30,30,31,31áâà2,31ª1,32ª1
7700000000012650003
32ª1áâà1,32ª2,32ª3,33,33áâà1,33ª1,34
7700000000012650004
7700000000012650005
36áâà6,36áâà7,36áâà8,36áâà9,36áâà10
7700000000012650006
36áâà11,36áâà12,36áâà13,36áâà14,37áâà1
7700000000012650007
39,39áâà1,39áâà2,39áâà3,39áâà1
7700000000012650008
39áâà2,40,40áâà2,40áâà3,40áâà4,40áâà5
7700000000012650009
40áâà6,41áâà6,41,46,46ª2
7700000000012650010
9,11,11áâà2,13ª1,13ª2,15,17ª1
7700000000012650011
17ª1áâà2,17ª2,17ª3,18/20,19,19áâà1
7700000000012650012
19áâà2,19áâà4,19áâà5,19,19,20,22
7700000000012650013
22áâà2,22áâà3,22ª2
7700000000012650014
2,2áâà1,2áâà2,2áâà3,2áâà4,2áâà9,2ª2
7700000000012650015
2ª2áâà2,2áâà1,2áâà2,2áâà3,2áâà4
7700000000012650016
2áâà5,3ª1,3ª2,3ª3,3ª3áâà1,3ª4áâà1
7700000000012650017
3ª4áâà2,3ª4áâà3,3ª4áâà4,3ª4áâà5,3ª5
7700000000012650018
3ª5áâà1,4,5,5ª2,6,7áâà1,7áâà2,7áâà3
7700000000012650019
7700000000012650020
7áâà10,7áâà11,7áâà12,7áâà13,7áâà14,7ª3
7700000000012650021
7ª3áâà1,7ª3áâà2,7ª3áâà3,7ª3áâà4
7700000000012650022
7ª3áâà5,7ª3áâà6,7ª3áâà8,7ª3áâà9
7700000000012650023
7ª3áâà11,7ª3áâà12,7ª3áâà13,7ª3áâà14
7700000000012650024
7ª3áâà15,7ª3áâà16,7ª3áâà17,7ª3áâà18
7700000000012650025
7ª3áâà19,7,7áâà1,7áâà2,7áâà3
7700000000012650026
7áâà4,8,8áâà2,8áâà3,10,12,12áâà1,14
7700000000012650027
16/21
7700000000012650028
7700000000012650029
7700000000012650030
1áâà13,1áâà15,1áâà16,1áâà18,1áâà23
7700000000012650031
1áâà27,1áâà29,1áâà30,1áâà31,1áâà32
7700000000012650032
1áâà33
7700000000012650033
7áâà1,7áâà2,7áâà3,7áâà2,7áâà3
7700000000012660001
123290
7áâà4,7áâà5,7áâà6,7áâà7,7áâà8
7700000000012660002
7áâà10,7áâà13,16áâà1,16áâà2
7700000000012660003
16áâà3,16áâà4,16áâà5,16áâà7
7700000000012660004
16áâà8,16áâà9,16áâà10,16áâà11
7700000000012660005
1,1áâà2,2,4,6,10/6,12áâà1,12áâà2,14
7700000000012670001
14,14áâà2,14áâà3,14áâà4,14áâà5
7700000000012670002
14áâà6,14áâà7,14áâà8,26áâà1
7700000000012670003
26áâà2,26áâà9
7700000000012670004
3áâà1,3áâà2,4,5áâà1,5áâà2,5áâà3,6,8
7700000000012680001
10áâà1,10áâà4,11,12,14áâà1,14áâà2,16
7700000000012680002
8,9,9,10,10áâà2,11,12,12áâà2,13
7700000000012690001
13áâà1,13áâà4,13áâà5,13ª1,14,14áâà2
7700000000012690002
15/22,16/12,18,20,21,22,23
7700000000012690003
1,2,2,4,4áâà2,4,4áâà1,4áâà1,4,4
7700000000012710001
5,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5,6áâà6
7700000000012710002
6áâà8,6áâà16,6áâà17,6áâà19,6áâà20
7700000000012710003
6áâà22,6áâà23,6áâà24,6áâà1
7700000000012710004
4,6,6,8,10,11,12,14
7700000000012720001
2,3áâà1,3áâà2,4,5,6,8,9,10,11,12,14,15
7700000000012730001
16,17,18,19,20,21,22,23,24,25,26,27,28
7700000000012730002
29,30,31,32,33,34,36,37,38,40
7700000000012730003
1,2,3,4,5,6,7,9,10,11,11,12,12,13,16
7700000000012740001
17,18,19,20,21,22,22áâà5,23,24,28
7700000000012740002
1,2,3áâà2,4,5,7,8,10,12,13,14,15
7700000000012750001
7700000000012760001
1,1ª1,1,2,3,4,5,6,7,8,9,10,11,12,13
7700000000012770001
14,15,16,17,18,19,22,23,24,25,26
7700000000012770002
27ª1,28,29,30,31,31,32,33,34,35,35
7700000000012770003
37,37
7700000000012770004
2,3,4,5,7,8,9,10,11,12,13,14,15,16,17
7700000000012780001
18,19,20,21,22,105
7700000000012780002
áâà1,áâà2,áâà3,3,4/6,7,7áâà2,7áâà3,7
7700000000012820001
9,9áâà2,9áâà3,9áâà4,9áâà5,11,11áâà2
7700000000012820002
11áâà3,11áâà9
7700000000012820003
1,2,2áâà6,3,4,6,8,8áâà5,10
7700000000012840001
21áâà1,21áâà3,21áâà4,21áâà5,21áâà6
7700000000012850001
7700000000012850002
21áâà13,21áâà14,21áâà15,21áâà16
7700000000012850003
21áâà17,21áâà18,21áâà19,21áâà20,21ª2
7700000000012850004
21ª2áâà1,21ª4,21ª4áâà1,26áâà1,26áâà2
7700000000012850005
26áâà3,26áâà4,26áâà5,26áâà6,28,28áâà3
7700000000012850006
28áâà5,28áâà6,28ª1
7700000000012850007
25,25áâà1,25áâà3,27,27áâà1,27áâà2
7700000000012850009
27áâà3,27áâà5,27áâà7,27áâà8,27áâà9
7700000000012850010
27áâà10,27áâà11,27áâà12,27áâà13
7700000000012850011
7700000000012850012
27áâà22,27áâà26,30ª1,30ª2,30ª3,30ª4,32
7700000000012850013
32ª1,32ª2,32ª2áâà1,32ª2áâà5,34ª1,34ª2
7700000000012850014
34ª3,34ª4,36ª1,36ª1áâà1,36ª1áâà2,36ª2
7700000000012850015
38ª1,38ª2,40,42,42áâà1,42ª1,42ª2áâà1
7700000000012850016
42ª2áâà2,44,44áâà1,44áâà2,44áâà3
7700000000012850017
7700000000012850018
44áâà9,44áâà10,44áâà12,44áâà13,44áâà14
7700000000012850019
44áâà15,44áâà21,46,46áâà1,46áâà3
7700000000012850020
46áâà4,46áâà5,46áâà6,46áâà7,46áâà8
7700000000012850021
46áâà9,46áâà10,46áâà14,46áâà14
7700000000012850022
46áâà15,46áâà17,46áâà19,46áâà20
7700000000012850023
46áâà21,46áâà33,46áâà34,46áâà36
7700000000012850024
46áâà41,46ª3,46ª3áâà1,48,48áâà1,48áâà2
7700000000012850025
48ª1,50,52,54,54ª1,54,56,56áâà2,58
7700000000012850026
3ª2,3ª2áâà1,3ª2áâà2,3ª2áâà3,3ª2áâà5
7700000000012850027
7700000000012850029
3ª2áâà10,3ª2áâà11,4ª1,4ª1áâà1,4ª2,4ª3
7700000000012850030
4ª4,5ª1,5ª1áâà1,5ª2,5ª3,5ª4,5ª5,5ª6
7700000000012850031
5ª7,5ª7áâà3,6ª1,6ª1áâà2,6ª2,6ª3
7700000000012850032
6ª3áâà1,7,8,8ª1,8ª1áâà2,9áâà1,9ª1,9ª2
7700000000012850033
9ª3,9ª4,11ª1,11ª2,11ª2áâà2,12ª1,12ª2
7700000000012850034
12ª2áâà2,13ª1,13ª2,13ª3,14,14ª1,15,16
7700000000012850035
16áâà2,17ª1,17ª2,17ª2áâà2,18ª1,18ª2,19
7700000000012850036
20,22,22ª1,24
7700000000012850037
4,6,6_8áâà7,10,10áâà2,10áâà2,12,12
7700000000012870001
14áâà1,14áâà2,14áâà3,16,18
7700000000012870002
3áâà1,3áâà2,3áâà3,15áâà1,15áâà2
7700000000012900001
15áâà3,19,19áâà1,19áâà2,19áâà3,19áâà4
7700000000012900002
19áâà6
7700000000012900003
4,8áâà1,8áâà2,8áâà3,8áâà4,8áâà15
7700000000012900004
8áâà17,8áâà18,8áâà19
7700000000012900005
21,21ª2,21/15,23,23áâà2
7700000000012900006
1áâà1,2,3/4,4áâà1,4áâà2,4áâà3,5,5
7700000000012920001
6áâà2,7,8áâà2,8áâà3,9,10áâà1,10áâà2,11
7700000000012920002
12áâà1,12áâà2,14áâà1,16,17,19áâà1,19áâà2
7700000000012920003
4áâà1,7
7700000000012930001
1áâà1,1áâà2,1áâà3,2áâà1,2áâà2,4,6
7700000000012930002
7áâà2,7áâà4,10,10áâà1,10áâà3,10áâà4,12
7700000000012930003
3áâà1,3áâà2,3áâà3,3áâà5,3áâà6,3áâà7
7700000000012940001
3áâà8,3áâà9,5áâà2
7700000000012940002
2,4,5,6,7,8,9,10,11,12,13,13áâà1,14
7700000000012950001
15,16,17/36,18,19,20/34,21,22/43,23,26
7700000000012950002
3,10,11,13,13áâà2,15
7700000000012990001
20,20áâà2,23áâà1,25,25/9áâà2
7700000000012990002
105043
32áâà1,32áâà2,32áâà3,32áâà4,32áâà5
7700000000013010001
1,1ª1,1ª2,1ª2áâà2,1ª2áâà4,1ª2áâà5
7700000000013020001
117152
1ª2áâà6,1ª2áâà7,1ª2áâà8,1ª2áâà9
7700000000013020002
1ª2áâà10,1ª2áâà11,1ª2áâà12,1ª2áâà13
7700000000013020003
1ª3,1ª3áâà1,2,2áâà1,2áâà1,2áâà1
7700000000013020004
2áâà1,2áâà1,2áâà1,2áâà2,2áâà3,2áâà4
7700000000013020005
7700000000013020006
7700000000013020007
7700000000013020008
2áâà22,2áâà23,2áâà25,2áâà26,2áâà28
7700000000013020009
2áâà31,2áâà32,2áâà33,2áâà34,2áâà35
7700000000013020010
2áâà36,2áâà37,2áâà43,2áâà57,2áâà60
7700000000013020011
2áâà78,2,2áâà1,2áâà3,2áâà4,2áâà5
7700000000013020012
2áâà6,2,3ª1,3ª1áâà2,3ª2,3ª3,3ª4
7700000000013020013
3ª4áâà2,3,3áâà2,3,3áâà1,3áâà3
7700000000013020014
3áâà5,3áâà7,3áâà8,3áâà10,3áâà11
7700000000013020015
3,4,4ª2,4ª3,5ª1,5ª2,5ª3,5ª3áâà2,5ª4
7700000000013020016
6ª1,6ª1áâà3,6ª1áâà4,6ª2,6ª2áâà2,6ª3
7700000000013020017
6ª4,6ª5,6ª6,7ª1,7ª1áâà2,7ª2,7ª2áâà2
7700000000013020018
7ª3,7ª4,7ª4áâà2,7ª5,7ª5áâà1,7,7áâà2
7700000000013020019
7áâà3,7áâà4,7áâà5,7áâà6,7áâà7
7700000000013020020
7áâà8,8ª,8ª,8ª2,8ª2áâà2,8ª2áâà3,8ª3
7700000000013020021
8ª6,8ª7,8ª8,8áâà2,8áâà3,8áâà4,9ª1
7700000000013020022
9ª1áâà2,9ª2,9ª3,9,10ª1,10ª1áâà2,10ª2
7700000000013020023
10ª3,10ª4,10ª5,10ª5áâà2,10ª5áâà3,10ª6
7700000000013020024
10ª8,10ª9,10ª10,10,11,11ª1,11ª2,13
7700000000013020025
13áâà2,13,13áâà1,13áâà2,15ª1,15ª2
7700000000013020026
15,15áâà2,15áâà3,18,18áâà2
7700000000013020027
7700000000013020028
7700000000013020029
18áâà12,18áâà13,18áâà14,18áâà16
7700000000013020030
18áâà18,18áâà20
7700000000013020031
3,3áâà2,5,5,7ª1,7ª2,9,10,10áâà2,11
7700000000013030001
16,20,20áâà2,20áâà4,20áâà7,23
7700000000013030002
11,11,11áâà2,17,19,21,25/5,27
7700000000013040001
27áâà1,29,40,41
7700000000013040002
3,5áâà1,5áâà2,5,9áâà1,9áâà2,9áâà4
7700000000013040003
12áâà1,12áâà2,14_16,18,24áâà1,24áâà2
7700000000013040004
24áâà3,24áâà4
7700000000013040005
1,1áâà1,2,3,4,4áâà2,6,8,8áâà1,8áâà2
7700000000013120001
8ª1,10,12,14,14áâà1,14ª1,16áâà4,16áâà5
7700000000013120002
16áâà6,16áâà7,16ª2,16ª3,18ª4,18
7700000000013120003
20,20áâà1,20,22,24,24áâà1,24áâà2,26
7700000000013120005
28,52áâà1,52áâà2,52áâà2,52áâà3
7700000000013120006
52áâà4,52áâà5
7700000000013120007
1,2,3,4,5,6,8,8ª2
7700000000013130001
2,2áâà1,4,4áâà1,4áâà2,5ª1,5ª2,5ª3,6,7
7700000000013140001
8áâà2,8ª1,8ª2,9,10,11,12,13,13áâà1
7700000000013140002
14/12,15,15áâà1,15áâà2,15ª2,17,19
7700000000013140003
1ª1,1ª2,1/2áâà5,1,2/1áâà1,2/1áâà2
7700000000013150001
2/1áâà3,2/1áâà4,2/1áâà5,2/1áâà6
7700000000013150002
2/1áâà7,2/1áâà8,2/1áâà11,2/1áâà12
7700000000013150003
2/1áâà13,2/1áâà14,2/1áâà15,2/1áâà24
7700000000013150004
2/1áâà29,3,4,4áâà1,4áâà2,4,4,4áâà1
7700000000013150005
4áâà2,4áâà3,5ª1,5ª2,6áâà1,6áâà2,7,9
7700000000013150006
10ª1,10ª2,10ª3,10ª3áâà2,10ª3áâà3,11ª3
7700000000013170001
115142
12ª1,12ª2,12ª2áâà2,12ª2áâà3,13ª1,13ª2
7700000000013170002
13ª3,14ª1,14ª2,15ª1,15ª1áâà2,17
7700000000013170003
2,2áâà4,2áâà6,2áâà7,2ª2,2ª3,3,4,4áâà2
7700000000013170004
115407
5ª1,5ª2,5ª3,5ª4,5ª5,6,7áâà2,7ª1
7700000000013170005
7ª1áâà2,7ª2,7ª3,8ª1,8ª2,8ª3,9ª1,9ª2
7700000000013170006
9ª3,9ª4,9ª5,11ª1,11ª2,11ª2áâà2
7700000000013170007
1,1,2áâà1,3,4,4,5,5,5áâà1,6,6áâà3
7700000000013190001
125466
6áâà4,7,13,15,17,17,17,19,21
7700000000013190002
19/2,21,22,22áâà2,23,24áâà2,24áâà3
7700000000013200001
24áâà4,25áâà1,26áâà1,26áâà4,27,28áâà1
7700000000013200002
32,33,35,38,41ª4,43
7700000000013200003
1/2áâà6,2áâà2,2áâà3,2áâà3,4áâà1,4áâà2
7700000000013210001
5,5áâà3,6áâà2,6/13áâà1,14,14/36áâà4
7700000000013210002
2áâà1,2áâà3,2áâà4,2áâà5,2áâà6,2áâà7
7700000000013230001
2áâà13,2áâà16,2áâà18,2áâà19,5áâà
7700000000013230002
5áâà3,5/23áâà1,5/23áâà2,7,13
7700000000013230003
3,3áâà2
7700000000013240001
3,11,13,15,17
7700000000013250001
18/1,20,22ª1,22ª2,23,23áâà1,23áâà2
7700000000013260001
23áâà3,23áâà3,23áâà3,23áâà3,23áâà3
7700000000013260002
23áâà3,23áâà3,23áâà4,23áâà5,23áâà6
7700000000013260003
7700000000013260004
23áâà13,23,24,25,25áâà2,25áâà3,26ª1
7700000000013260005
26ª2,28,30ª1,30ª2,30ª2áâà2,32,32áâà2
7700000000013260006
34ª1,34ª2,36,38ª1,38ª2,40,42ª1,42ª2
7700000000013260007
42ª2áâà1,44,44áâà1
7700000000013260008
1,1áâà1,1,3,3áâà2,3áâà3,3áâà1,3áâà2
7700000000013260009
3áâà3,3áâà4,5,5áâà1,5ª2,5ª2áâà1,5ª3
7700000000013260010
7,9áâà1,9áâà2,13,13áâà1,13áâà2,15áâà1
7700000000013260011
15áâà9,17áâà1,17áâà2,17áâà3,17áâà4
7700000000013260012
17áâà13,17áâà17,19áâà1,19áâà2,21áâà1
7700000000013260013
21áâà2,21áâà3
7700000000013260014
2,2,4,6,8ª1,8ª2,10,10áâà1,12ª1,12ª2
7700000000013260015
129515
14,16/2
7700000000013260016
13áâà1,13áâà2,13áâà3,13áâà4,13áâà4
7700000000013270001
13áâà4,13áâà5,13áâà6,13áâà7,13áâà8
7700000000013270002
13áâà9,13áâà10,13áâà11,13áâà13,13áâà14
7700000000013270003
13áâà15,13áâà16,13áâà17,13áâà18
7700000000013270004
13áâà18,13áâà18,13áâà18,13áâà18
7700000000013270005
13áâà18,13áâà18,13áâà19,13áâà20
7700000000013270006
13áâà22,13áâà36,13áâà37,13áâà40
7700000000013270007
13áâà41,13áâà42,13áâà43,15,15áâà14
7700000000013270008
15áâà15,15áâà17,15áâà18
7700000000013270009
2/1áâà1,8,12áâà1,12áâà2,12áâà3,12áâà4
7700000000013270010
12áâà5,12áâà6,12áâà7,12áâà9,12áâà10
7700000000013270011
12áâà11,12áâà12,12áâà13,12áâà14
7700000000013270012
12áâà15,12áâà17,12áâà18,12áâà19
7700000000013270013
12áâà21,12áâà22,12áâà23,12áâà26
7700000000013270014
12áâà27,12áâà29,12áâà32,12áâà33
7700000000013270015
12áâà62,12áâà63,12áâà64,12áâà68
7700000000013270016
12áâà70,12áâà71,12áâà126
7700000000013270017
5,7,8ª1,8ª2,9,11,12,12áâà2,14,14,14
7700000000013280001
121433
14,16áâà2,16ª2,16ª2áâà3
7700000000013280002
1áâà1,1áâà2,2,2áâà2,2áâà3,2áâà4,2áâà7
7700000000013290001
3áâà1,3áâà2,5áâà1,5áâà4,5áâà5,5áâà6
7700000000013290002
5áâà7,5áâà9,5áâà11,5áâà12,5áâà13
7700000000013290003
5áâà15,5áâà16,7,9/27áâà1,11áâà1,11áâà2
7700000000013290004
11áâà5,11áâà6,11áâà10,13,18áâà1
7700000000013290005
18/20ª1,18/20ª2,18/20ª3,18/20ª4,20áâà1
7700000000013290006
7700000000013290007
20áâà7,20áâà8,20áâà9,25áâà1,25áâà2
7700000000013290008
25áâà3,25áâà4,25áâà5,25áâà6,25áâà7
7700000000013290009
25áâà8,25áâà9,25áâà10,25áâà11,25áâà12
7700000000013290010
26,26áâà1,26áâà2,26áâà3,26áâà5,26áâà6
7700000000013290011
26áâà7,26áâà1,27áâà1,27áâà2,27áâà3
7700000000013290012
27áâà4,27áâà5,27áâà6,27áâà7,27áâà8
7700000000013290013
7700000000013290014
7700000000013290015
28áâà14,28áâà15,28áâà16,28áâà19
7700000000013290016
28áâà22,28áâà24,28áâà28,28áâà29
7700000000013290017
28áâà30,28áâà31,28áâà32,28áâà33
7700000000013290019
28áâà34,28áâà39,28áâà40,28áâà42
7700000000013290020
28áâà43,28áâà44,28áâà46,28áâà53
7700000000013290021
28áâà54,28áâà60
7700000000013290022
23/8,23/8áâà2,25,30/6,31,32,33,33áâà1
7700000000013300001
33áâà2,34
7700000000013300002
6,12,12áâà2,13,13áâà2,14,15,22
7700000000013300003
3,4,5,6,7,8,8,9áâà1,10,10,10áâà2
7700000000013330001
143350
6,38ª8
7700000000013360001
7700000000013370001
3,3,9,9áâà2,11,11áâà1,13/23áâà1
7700000000013370002
13/23áâà2
7700000000013370003
7/2áâà1,7/2áâà2,7/2áâà3,7/2áâà5
7700000000013380001
1áâà2,1/4áâà1,1/4áâà2,1/4áâà14
7700000000013400001
1/4áâà15,3/1áâà6,3/1áâà7
7700000000013400002
2,4áâà1,6áâà1,6áâà2,7,7áâà1,9,10
7700000000013400003
12/7áâà1,12/7áâà3,12/7áâà4,12/7áâà5
7700000000013400004
13ª1,13ª2,14_16áâà1,14_16áâà2
7700000000013400005
14_16áâà3,14_16áâà5,17ª5,18áâà4
7700000000013400006
18_22áâà1,18_22áâà2,18_22áâà5,20áâà3
7700000000013400007
21/2áâà1,22áâà2,23áâà1,24áâà2
7700000000013400008
24/30áâà1,24/30áâà1,24/32,24/32áâà7
7700000000013400009
25,25áâà2,25áâà3,25áâà5,26áâà1,26áâà2
7700000000013400010
7700000000013400011
29áâà1,29áâà3,29áâà9,29áâà10,29áâà11
7700000000013400012
29áâà12,29áâà13,29áâà14,30áâà1,30áâà2
7700000000013400013
30áâà3,30áâà7,32,32áâà10,32,33,34áâà1
7700000000013400014
34áâà3,34áâà4,34áâà11,34áâà1,34áâà2
7700000000013400015
36,36áâà2,36áâà3,36áâà4,36áâà7,38áâà6
7700000000013400016
42áâà1,42/20,44,44áâà1,44áâà3,46,48
7700000000013400017
48áâà8,48áâà9,48
7700000000013400018
35áâà1,37áâà2,39áâà3,39/1áâà1,39/1áâà2
7700000000013400019
41áâà1,41áâà2,41áâà4,53áâà1,53áâà2
7700000000013400020
53áâà3,53áâà8,53áâà14,53áâà16,53áâà17
7700000000013400021
53áâà18,53áâà20,53áâà21,53áâà24,57áâà5
7700000000013400022
57áâà6,57
7700000000013400023
50,50áâà1,50áâà2,50áâà3,50áâà5
7700000000013400024
50áâà6,54áâà1,54áâà2,54/3áâà1,56áâà3
7700000000013400025
38_40áâà5
7700000000013400026
56áâà4,58,59,60,61áâà2,61áâà4,61ª1,62
7700000000013400027
64áâà2,64áâà5,64/17,65,65áâà2,66/20
7700000000013400028
68áâà1,68áâà2,68/18áâà1,68/18áâà3
7700000000013400029
68/18áâà5,68/18áâà8,70,70áâà2,70áâà3
7700000000013400030
70áâà4,71,72,72,73,73áâà3,75,76/21áâà1
7700000000013400031
52áâà1,52áâà4,52áâà5,52áâà6,52/16áâà1
7700000000013400032
52/16áâà2,52/16áâà3
7700000000013400033
1,4,4áâà2,5,5áâà2,5áâà3,6,8,8áâà1,12/4
7700000000013450001
19,21,23,35,35áâà1,37,38ª1,38ª2
7700000000013450002
38ª2áâà1,38ª2áâà2,39,41,53,53áâà1,53áâà2
7700000000013450003
1ª1,1ª2,1,1áâà1,1,3ª1,3ª1áâà1,3ª2
7700000000013460001
3ª3,3ª4,3ª4áâà1,3ª5,5ª1,5ª2,5,5,7ª1
7700000000013460002
7ª1áâà1,7ª2,7ª3,7ª3áâà1,7áâà1,7,9ª1
7700000000013460003
9ª1áâà1,9ª2,11
7700000000013460004
5,6,6,12,12áâà1,14,16áâà1,18áâà1,20
7700000000013490001
20áâà1,22áâà1
7700000000013490002
15,15áâà2,17,26áâà1,26áâà2,26,28áâà1
7700000000013500001
28áâà2,30,30áâà2,30áâà3,32
7700000000013500002
1áâà1,2,3,3áâà2,3áâà3,4,8,10,11áâà1
7700000000013500003
11áâà2,11áâà3,11áâà4,12áâà3,12ª1,12ª2
7700000000013500004
13áâà1,13áâà2,13áâà3,13áâà4,13áâà5,18
7700000000013500005
20,22,24áâà1
7700000000013500006
9_11
7700000000013510001
4_6,8,8áâà2,10
7700000000013510002
1,1áâà2,1áâà4,2,3áâà1,3áâà2,3áâà1
7700000000013520001
123308
3áâà2,3áâà3,3áâà4,3áâà5,3áâà6
7700000000013520002
3áâà7,3,3áâà1,3áâà1,3áâà2,3áâà3
7700000000013520003
3áâà4,4,4áâà2,4áâà3,5áâà1,5áâà2,5áâà3
7700000000013520004
5áâà4,6ª1,6ª2,6ª3,7áâà1,7áâà3,7áâà4
7700000000013520005
7áâà5,7,7áâà1,7áâà2,7áâà1,7áâà3
7700000000013520006
7áâà4,7áâà5,7áâà6,7áâà7,7áâà8
7700000000013520007
7áâà16,8
7700000000013520008
21áâà2,21áâà3
7700000000013520009
9,9áâà2,9,9áâà2,9áâà3,10áâà2,10ª1
7700000000013520010
10ª2,10ª3,11áâà1,11áâà2,12,12ª1,13áâà1
7700000000013520011
7700000000013520012
13áâà7,13áâà8,13áâà9,13áâà10,13áâà11
7700000000013520013
13áâà12,13áâà13,13áâà14,13áâà15
7700000000013520014
13áâà18,13áâà28,14ª1,14ª2,14ª3,15áâà7
7700000000013520015
15ª1,15ª2,15,16,17,17áâà2,17áâà3
7700000000013520016
17áâà10,17áâà12,17áâà1,17áâà3
7700000000013520017
17áâà4,17áâà1,18ª1,18ª2,18ª3,19
7700000000013520018
19áâà2,19áâà3,19áâà4,19,20,20áâà2
7700000000013520019
20áâà3,21áâà1,21áâà2,21áâà3,21
7700000000013520020
21áâà1,22áâà4,22ª1,22ª2,22,24,24áâà2
7700000000013520021
24áâà4
7700000000013520022
23áâà1,25,25áâà2,25áâà3,25áâà4,25áâà1
7700000000013520023
27,27áâà2,27áâà1,27áâà2,28,28ª1,28
7700000000013520024
29áâà1,30,31áâà1,31áâà2,31áâà3,32,34
7700000000013520025
35,36,36áâà2,36áâà3
7700000000013520026
31áâà4
7700000000013520027
3,7,11áâà1,11áâà2,11áâà3,11áâà4,11áâà5
7700000000013530001
129164
13áâà1,13áâà2,13áâà3,13áâà4,13áâà5
7700000000013530002
13áâà6,15ª1,15ª2,17,17áâà3
7700000000013530003
3áâà1,3áâà2,3áâà3,3áâà4
7700000000013540001
5áâà2,5/36,5/36áâà1,7áâà1,7áâà2,7áâà3
7700000000013550001
7áâà4
7700000000013550002
2,2áâà2,6,14/2áâà1
7700000000013550003
7700000000013560001
2áâà7,2áâà8,4áâà1,4áâà2,4áâà3,5áâà1
7700000000013560002
5áâà2,5áâà3,13áâà1,13áâà2,13áâà4
7700000000013560003
15áâà1,15áâà2,15áâà3,15áâà4,16_20áâà1
7700000000013560004
16_20áâà8,16_20áâà9,16_20áâà11
7700000000013560005
16_20áâà12,16_20áâà13,17áâà1,17áâà3
7700000000013560006
17áâà5,21_23áâà1,21_23áâà2,21_23áâà3
7700000000013560007
22/39,25,25áâà2,25ª1,25,27áâà1,27áâà3
7700000000013560008
27áâà5,27áâà6,29,31_33,35áâà1,35áâà2
7700000000013560009
35áâà3,35áâà4,37áâà1,37áâà2,37áâà3
7700000000013560010
1,2áâà3,2áâà4,2ª1,2ª2,3
7700000000013570001
2áâà1,3,4,4áâà1,4áâà2,4áâà3,4áâà4
7700000000013580001
7700000000013580002
4áâà11,5,7,9
7700000000013580003
3,4,5,6ª1,6ª2
7700000000013590001
1,3,3áâà2,4áâà3,4ª1,4ª2,4ª3,4ª3áâà1
7700000000013600001
4ª4,4ª5,5,6,6ª2,6ª2áâà1,8,8áâà1
7700000000013600002
2,2áâà2,2áâà3,6áâà1
7700000000013610001
5,5áâà2,5áâà3,5ª1,5,12,15ª1,15ª2,15ª4
7700000000013610002
15,16,20,20áâà2,20áâà4,28áâà1,29ª2
7700000000013610003
29ª31,29ª31,30,31,31áâà16,31ª1,31ª2
7700000000013610004
31ª3,31ª4,31ª4,31ª4,31ª5,31ª7,31ª8
7700000000013610005
31ª9,31ª10,31ª11,31ª12,31ª14,31ª15
7700000000013610006
31ª17,31ª18,31ª26,31ª29,31ª40,31ª41
7700000000013610007
31ª44,31ª45,31ª46,31ª47,31ª53,32
7700000000013610008
32áâà1,32áâà2,32áâà3
7700000000013610009
31,31áâà1,31áâà3,31áâà4,31áâà20
7700000000013610010
31áâà21,31áâà22,31áâà23,31áâà24
7700000000013610011
31áâà26,33,33áâà6,33ª1,33ª2,33ª3,33ª4
7700000000013610012
33ª5,35áâà1,35áâà2,35áâà3,35áâà4
7700000000013610013
35áâà6,35áâà7,35áâà8,35áâà9,35áâà11
7700000000013610014
35áâà12,35áâà13
7700000000013610015
2ª1,2ª2,2ª2áâà1,2ª3,3,3áâà1,3ª1,4,4ª1
7700000000013620001
4ª1áâà1,5,6,8,9,10,10áâà1,11/2,12,12ª1
7700000000013620002
12ª2,12ª3,13ª1,13ª2,14ª1,15ª3,15ª4
7700000000013620003
15ª5,16,16áâà1,16,16,17ª1,17ª1áâà1
7700000000013620004
17ª2,18ª1,18ª2,20,22,22áâà1,22áâà2,22
7700000000013620005
23ª1,23ª2,23ª3,23ª4,23ª4áâà1,24,24
7700000000013620006
3,3áâà1,3áâà2,8áâà1,8áâà2,14,14ª1
7700000000013630001
14ª1áâà2,14ª2,16,16áâà1,17,18,18áâà2
7700000000013630002
19,19áâà2,20,20áâà1,22,23,24,26,28
7700000000013630003
28áâà1,28áâà2,32,34,34áâà1,36
7700000000013630004
2áâà33,2/4áâà1,2/4áâà2,2/4áâà3,2/4áâà4
7700000000013640001
2/4áâà5,2/4áâà7,2/4áâà11,2áâà1,2áâà2
7700000000013640002
4áâà1,4áâà2,5áâà1,6áâà2,6/5áâà1,7áâà2
7700000000013640003
7áâà8,7_9áâà1,11/6áâà1,11/6áâà2,11/6áâà3
7700000000013640004
7700000000013650001
2,3,3áâà2,3áâà3,3áâà4,3áâà5,3áâà9
7700000000013670001
3áâà10,3ª2,5,6,6áâà1,7,7áâà2,7áâà3
7700000000013670002
7áâà4,7áâà5,7áâà6,7áâà9,7áâà10,7áâà12
7700000000013670003
7áâà13,7áâà23,7áâà24,7áâà25,7áâà26
7700000000013670004
8áâà1,8áâà2,8áâà5,8áâà6,8áâà7,8áâà10,9
7700000000013670005
10áâà3,12,12áâà1,12áâà2,14áâà1,14áâà2
7700000000013670006
16áâà1,16áâà2,16áâà3,16áâà4,17/5
7700000000013670007
1ª1,2,2áâà1,3,3áâà2,3áâà3,3áâà4,4,5
7700000000013680001
5ª1,6áâà2,6ª1,6ª1áâà1,6ª2,6ª2áâà1,7
7700000000013680002
7ª1,7ª1áâà1,8,9
7700000000013680003
2,2áâà1,2áâà2,4,4áâà2,4áâà3,6,6áâà2
7700000000013690001
6áâà3,6áâà4,6áâà5,7áâà1,7áâà2,7áâà3
7700000000013690002
7700000000013690003
7áâà10,7áâà11,7áâà12,8,8áâà1,9,9ª1,10
7700000000013690004
11,13,13áâà1,13áâà2,17,17áâà2,19,19áâà1
7700000000013690005
1,1áâà3,1áâà5,1ª1,1ª2,1ª3,1ª4,3,4,5,5
7700000000013700001
6ª1,6ª2,7,7áâà3,7áâà3,7áâà4,7áâà5,7
7700000000013700002
8,8áâà1,10
7700000000013700003
2,3,4áâà1,4áâà2,4áâà3,6,8,9,9áâà2
7700000000013710001
1,1áâà1,2,2,3,3áâà1,3áâà2,3ª1,3ª3,3
7700000000013720001
4,4ª1,7,7áâà2
7700000000013720002
1/4,3áâà3,5áâà1,5áâà2,7áâà1,7áâà2,7ª1
7700000000013730001
1,1áâà2,1,2,2,3,3áâà2,4,4ª1,5ª1
7700000000013740001
5ª1áâà2,5ª2,6,6,7,8,9ª1,9ª2,9áâà4,11
7700000000013740002
7700000000013740003
3,5,5áâà2
7700000000013750001
4,8,8áâà1,10,12,14/36,16,16áâà2,18
7700000000013760001
18áâà3,20,20,20áâà5,22,22,24,30,30
7700000000013760002
32,32/23ª1,34,34áâà3
7700000000013760003
46,48,48áâà2,50,50áâà1,52,54,56,56áâà2
7700000000013760004
105077
45263558000
58,58áâà1,60áâà1,60/10,61,62,63/12ª1
7700000000013760005
63/12ª2,63/12ª3,64,66,67ª1,67ª2,69
7700000000013760006
71/25ª1,71/25ª2,71/25ª3,72,73,73áâà2
7700000000013760007
74,75,75áâà2,75ª1,77
7700000000013760008
38,40,40áâà1,40áâà2
7700000000013760009
1/28,3,3,7,9,11/31,13,15,19,19
7700000000013760010
105264
29áâà1,31,31,31áâà1,31áâà2,37,41
7700000000013760011
41,43,47,49,49áâà1,55,55áâà1,59
7700000000013760012
2,2,2áâà1,2áâà2,3,3áâà2,3ª2,5,5áâà1
7700000000013770001
5áâà2,5áâà3,6áâà1,6áâà2,6áâà3,20
7700000000013770002
20áâà3,20áâà4,20áâà5,20áâà6,20áâà7
7700000000013770003
7áâà1,7áâà2,7áâà3
7700000000013770004
30,30áâà3,30áâà4,30áâà6,30áâà7,30áâà8
7700000000013770005
7700000000013770006
1,1áâà35,1áâà1,1áâà2,1áâà3,3ª1,3ª2
7700000000013780001
4,4áâà1,4ª1,4,5áâà3,5ª1,5ª2,5,5áâà1
7700000000013780002
6,6ª1,6ª2,6ª3,7áâà3,7ª1,7ª2,8,8áâà2
7700000000013780003
8áâà3,8áâà4,8áâà5,8,9áâà3,9ª1,9ª2,9ª3
7700000000013780004
10áâà2,10áâà3,10áâà18,10áâà34,11
7700000000013780005
13,15,24ª1,24ª1áâà1,24,24áâà2
7700000000013780006
24áâà3,24áâà4,24,26,28,28áâà2,28áâà3
7700000000013780007
11áâà3,11áâà4,11áâà5,11áâà7,11áâà9
7700000000013780010
11áâà10,12,12áâà5,14ª1,14ª2,14ª3,16ª1
7700000000013780011
16ª2,16ª2áâà2,18áâà3,18ª1,18ª2,20ª1
7700000000013780012
20ª2,20ª3,22áâà2,22ª1,22ª2,22ª3
7700000000013780013
45,45áâà2,45áâà3,45áâà4,45áâà5,45áâà6
7700000000013790001
45áâà7,45áâà8,45áâà9,45áâà10,45áâà11
7700000000013790002
45áâà12,45áâà13,45áâà14,45áâà15
7700000000013790003
45áâà16,45áâà17,45áâà18,45áâà20,47,49
7700000000013790004
50,50áâà2,50áâà3,50áâà4,50áâà5,50áâà6
7700000000013790005
50áâà7,50áâà8,50áâà9,53,53áâà1,55
7700000000013790006
55áâà2,57,59,61,61áâà2
7700000000013790007
60áâà1
7700000000013790008
54,56,56áâà4,56áâà5,58,58áâà1,63
7700000000013790009
73áâà2,73,75/1,75,77áâà3,77ª1,77ª2
7700000000013790010
63áâà2,65,65áâà2,67,69/2,71,71áâà2,73
7700000000013790011
91áâà4,91ª1,91ª2,91ª3,91,93áâà4,93ª1
7700000000013790012
105203
93ª2,93ª3,99áâà1,113,115,115,117áâà3
7700000000013790013
117/1,119,121,123ª1áâà1,123/1ª1
7700000000013790014
7700000000013790015
83,85,87
7700000000013790016
105554
79,79áâà6
7700000000013790017
1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6
7700000000013810001
2áâà7,5,6,19,19áâà2,19áâà3,19áâà6
7700000000013810002
19áâà22,19,19áâà1,19áâà2,19áâà4
7700000000013810003
19áâà5,19áâà6,19áâà7,19áâà8
7700000000013810004
19áâà10,19áâà11,19áâà12,19áâà1
7700000000013810005
19áâà2,19áâà3,19áâà4,19áâà5
7700000000013810006
19áâà6,19áâà7,19áâà8
7700000000013810007
1áâà1,10,10áâà1,10áâà2,10áâà5,10áâà7
7700000000013820001
10áâà9,10áâà10,10áâà11,10áâà16
7700000000013820002
5áâà12,5áâà13,5áâà14,8,8áâà1,8áâà2
7700000000013830001
7700000000013830002
7700000000013840001
67áâà1,67áâà2,69áâà4,69áâà5,69áâà6
7700000000013840002
69áâà7,69áâà8,69áâà9,69áâà10,69áâà11
7700000000013840003
69áâà12,69áâà13,69áâà14,69áâà15
7700000000013840004
69áâà16,69áâà17,69áâà18,69áâà19
7700000000013840005
69áâà20,69áâà21,69áâà1,69áâà2
7700000000013840006
69áâà3,69áâà4,69áâà5,69áâà6,69
7700000000013840007
69áâà1,69,69,69áâà1,69áâà2
7700000000013840008
69áâà1,71ª,71áâà6,71ªáâà7,71áâà8
7700000000013840009
71áâà9,71áâà10,71áâà11,71áâà12,71áâà14
7700000000013840010
71áâà16,71ª2,71ª3,71ª5,71ª5áâà1,71
7700000000013840011
73áâà3,73áâà1,73,73áâà1,73áâà5,73
7700000000013840012
73,73,73áâà2,73áâà4,73áâà5
7700000000013840013
73áâà6,73áâà8,73áâà9,73áâà10
7700000000013840014
33,45,47,47,48,49,55,57,58,60,62
7700000000013840015
69áâà1,69áâà2,69áâà3
7700000000013840016
2,2áâà10,2áâà15,2áâà16,2áâà23,3,3
7700000000013840017
3áâà2,4,4,11,13,15,15ª1,15ª2,17
7700000000013840018
17áâà4,17ª1,17ª1áâà3,17ª2,17ª2áâà1
7700000000013840019
17ª2áâà2,19,20,22,22,24áâà6,24ª1
7700000000013840020
24ª1áâà4,24ª2,24ª3,25,25áâà2,27,27áâà2
7700000000013840021
44,44áâà1,44áâà2
7700000000013840022
105679
3áâà1,3áâà2,3áâà3,3áâà5,3ª2,3,5,5áâà1
7700000000013850001
5áâà2,7,7áâà2,9,9áâà2,11,11áâà2,11ª1
7700000000013850002
13ª1,13ª1áâà1,13ª2,13ª2áâà2,13ª3
7700000000013850003
2/12,4,6,6áâà1,8,12,14,14áâà1,16/11,16
7700000000013850004
áâà3,18áâà1,20,20áâà2,22,24,24ª2,26
7700000000013850005
28ª1,28ª2,30,32,32áâà1,36,38,40,42,44
7700000000013850006
46ª1,46ª2,46ª3,48ª1,48ª2,50,52,61
7700000000013850007
61áâà2,63áâà1,63/1,65,65áâà1
7700000000013850008
17,22,22ª1,22ª1áâà1,22ª1áâà2,22ª2,22ª3
7700000000013860001
24,26,26ª1,26ª1áâà1,26ª2,28,28áâà1
7700000000013860002
28áâà2,28ª1,28ª2,28ª3,30,30áâà1,34
7700000000013860003
34áâà1,34áâà2,34ª1,34ª2,34ª3,34ª3áâà1
7700000000013860004
34ª3áâà2,35ª1,35,36,37áâà1,37áâà2
7700000000013860005
37ª1,37ª2,37ª2áâà1,37ª2áâà2,37ª3,37ª4
7700000000013860006
37ª4áâà1,38,38ª1,38ª2,39ª1,39ª2,43
7700000000013860007
43áâà1,43áâà2,43ª1,43ª2,43ª3,43ª3áâà1
7700000000013860008
45,45ª1,45ª1áâà1,45ª1áâà2,45ª2
7700000000013860009
45ª2áâà1,46,46áâà1,46ª1,46ª1áâà1,46ª2
7700000000013860010
47,47ª1,47ª2,47ª3,47ª3áâà1,47ª4,47ª5
7700000000013860011
48,49,50,50ª1,50ª1áâà1,52,52áâà1
7700000000013860012
52áâà2,53,53ª1,53ª2,55,55ª1áâà1,57,59
7700000000013860013
3,3,4,6,8,8áâà1,9,10,12
7700000000013870001
1ª1,1ª2,1ª3,1ª6,1ª7,1ª8,1ª9,1,1áâà1
7700000000013880001
1áâà2,1áâà3,1áâà4,1áâà5,2,2áâà2
7700000000013880002
2ª1,2,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000013880003
7700000000013880004
7700000000013880005
7700000000013880006
3áâà27,3áâà29,3áâà31,3ª1,3áâà1,3áâà2
7700000000013880007
3áâà3,3áâà4,3áâà5,3áâà1,3áâà2
7700000000013880008
3áâà3,3áâà4,3áâà5,3áâà6,3áâà7,3
7700000000013880009
3áâà1,3áâà2,3áâà3,3áâà1,3áâà2
7700000000013880010
3áâà1,4,5,5ª1,5ª2,5áâà1,5,6,8/2,8
7700000000013880011
9,9áâà1,10,10áâà1,10áâà2,10ª1,12,12
7700000000013880012
1áâà2,1ª1,1ª2,3,4ª1,4ª2,5,6,6áâà2
7700000000013910001
6áâà3,6áâà4,6áâà5,6áâà6,6áâà7,6áâà8,8
7700000000013910002
8áâà2,9,10,11,11áâà1,11áâà2,12,14,16
7700000000013910003
21,21áâà1,21áâà3,21áâà4,21áâà5,21áâà7
7700000000013910004
21áâà12,21áâà13,21áâà14
7700000000013910005
1,1áâà1,1,1,2,3,3áâà1,3áâà2,3,4,5ª1
7700000000013920001
6,7,8,8,8áâà1,8áâà2,9,9áâà1,9ª1
7700000000013920002
10ª1,10ª2,11,12,12,13,14ª1,14ª2,15,16
7700000000013920003
16áâà1,18ª1,18ª2,20ª1,20ª2,22,24,26ª1
7700000000013920004
26ª2,28,30,32,32áâà1,32,34ª1,34ª2,36/48
7700000000013920005
1,2ª1,3,3áâà1,5ª1,5ª1áâà2,5ª2,5ª2áâà3
7700000000013930001
6áâà3,6ª1,6ª1áâà5,6ª2,7áâà4,7áâà6,7ª2
7700000000013930002
7ª2áâà4,7ª3,8áâà3,8áâà4,8ª1,8ª2,9ª1
7700000000013930003
9ª2,10áâà2,10ª1,11,12,14ª1,14ª2,16ª1
7700000000013930004
16ª2,16ª3,16ª4,16ª5,18
7700000000013930005
68áâà1,69áâà1,73áâà1
7700000000013930006
1/2áâà1,2,5,7,7áâà1,8,10,12,12áâà1
7700000000013940001
12áâà2,12áâà3,16,16áâà4
7700000000013940002
1,1,1áâà1,1áâà2,1áâà3,1,3,3áâà1
7700000000013960001
3áâà2,3,3áâà1,3áâà2,3áâà3,3,4
7700000000013960002
5áâà2,5,5áâà1,17,23áâà1,23áâà2
7700000000013960003
23áâà3,23áâà4
7700000000013960004
7700000000013970001
7700000000013970002
2áâà16,2áâà17,2áâà18,2ª1,2ª2,2ª3,2ª4
7700000000013970003
2ª5,2ª6,2ª7,2ª8,2ª9,2ª10,3áâà1,3áâà6
7700000000013970004
7700000000013970005
3áâà13,3áâà14,3áâà15,3áâà17,3áâà18
7700000000013970006
7700000000013970007
5/6áâà1,5/6áâà2,5/6áâà3,6áâà1,6áâà2
7700000000013970008
6áâà2,6áâà3,6áâà5,7áâà1,7áâà3,7áâà4
7700000000013970009
7áâà5,7áâà6,7áâà7,7áâà9,7áâà10,7áâà12
7700000000013970010
7áâà14,7áâà15,7áâà16,11ª1,11ª2,11ª4
7700000000013970011
11ª5,12/14,12/14áâà1,17áâà1,17áâà2
7700000000013970012
7700000000013970013
7700000000013980001
107143
2áâà7,2áâà1,2áâà2,2áâà3,2áâà1
7700000000013980002
2áâà2,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000013980003
3áâà6,3áâà7,3áâà8,3áâà9,3áâà10,3áâà14
7700000000013980004
3áâà15,4áâà1,4áâà1,4áâà2,4áâà3,4áâà1
7700000000013980005
4áâà2,4áâà3,4áâà4,4áâà5,4áâà5
7700000000013980006
7700000000013980007
4áâà4,4áâà5,5,6áâà1,6áâà1,6áâà2
7700000000013980008
6áâà2,6áâà3,6áâà4,6áâà6,6áâà7,6áâà7
7700000000013980009
7700000000013980010
7700000000013980011
6áâà18,6áâà20,6áâà21,6áâà29,6áâà30
7700000000013980012
6áâà31,6áâà32,6áâà38,6áâà1,7áâà1
7700000000013980013
7700000000013980014
8áâà7,8áâà8,8áâà9,8áâà14,9áâà1,9áâà2
7700000000013980015
7700000000013980016
7700000000013980017
7700000000013980018
1áâà13
7700000000013980019
2,2ª1,2ª1áâà2,2ª1áâà4,2ª2,2ª2áâà1,4ª1
7700000000013990001
123181
45283577000
4ª2,4ª2áâà4,4ª2áâà5,6áâà5,6ª1,6ª1áâà2
7700000000013990002
6ª1áâà3,6ª2,6ª2áâà1,6ª3,8ª1,8ª1áâà2
7700000000013990003
8ª2,8ª2áâà2,8ª3,8ª4,10ª1,10ª2,12ª1
7700000000013990004
12ª1áâà2,12ª2,14ª1,14ª1áâà2,14ª2,14ª3
7700000000013990005
16ª1,16ª1áâà1,16ª2,16ª2áâà1,16ª3,18
7700000000013990006
18áâà1,20ª1,20ª2,22ª1,22ª1áâà2
7700000000013990007
22ª1áâà3,22ª2,22ª3
7700000000013990008
24ª1,24ª1áâà2,24ª1áâà3,24ª3,25ª1,25ª2
7700000000013990009
123631
26ª2,27áâà1,27ª1,27ª2,27ª2áâà2,27ª3
7700000000013990010
28ª1,28ª1áâà1,28ª1áâà3,28ª2,28ª3,29ª1
7700000000013990011
29ª2,29ª3,31,31áâà1,33,33ª1,33ª2
7700000000013990012
33ª2áâà1,33ª2áâà4,33ª3,33ª4,33ª4áâà1
7700000000013990013
33ª5áâà1,33ª6,35,35áâà2,35áâà3
7700000000013990014
37ª1áâà1,37ª1áâà2,37ª2áâà1,39,39ª1
7700000000013990015
3,3áâà2,7,9,9áâà3,9ª2,9ª2áâà2,9,11
7700000000014000001
11áâà1,13ª1,13ª2,13ª2áâà2,13ª3,17
7700000000014000002
17áâà1,17áâà2,17áâà3,17áâà5,17
7700000000014000003
17áâà1,17áâà2,17áâà3,17áâà4
7700000000014000004
17áâà5,17áâà6,17áâà8,17áâà9
7700000000014000005
17áâà11,17áâà13,17áâà14,17áâà15
7700000000014000006
17áâà16,19,19áâà1,19áâà2,19áâà3
7700000000014000007
19áâà4,19áâà5,19áâà6,19áâà7,19áâà10
7700000000014000008
19áâà11,19áâà12,19,21áâà1,21áâà2
7700000000014000009
21áâà4,23áâà1,23áâà2,23áâà3,23áâà4
7700000000014000010
23áâà5,27áâà1,27áâà2,27áâà3,27áâà4
7700000000014000011
7700000000014000012
7700000000014000013
27áâà14,27áâà15,27áâà16,27áâà17,29
7700000000014000014
29áâà2,31áâà1,31áâà2,31áâà3,31áâà4
7700000000014000015
7700000000014000016
31ª1áâà1,31ª1áâà2,31ª1áâà3,31ª1áâà4
7700000000014000017
31,33áâà2,33áâà3,33áâà4,33áâà5,33áâà6
7700000000014000018
7700000000014000019
33áâà13,33áâà14,33áâà15,33áâà16
7700000000014000020
33áâà1,33áâà12,33áâà18,33áâà20,33áâà21
7700000000014000022
33áâà22
7700000000014000023
3áâà4,3ª1,3ª2,3ª3,5ª1,5ª2,6,8áâà4,8ª1
7700000000014020001
8ª3,8ª3áâà1,8ª3áâà2,8ª3áâà3,10ª1,10ª2
7700000000014020002
10ª2áâà2
7700000000014020003
36áâà1,36áâà4,36áâà5
7700000000014040001
22/1áâà1,22/1áâà3,24áâà1,26,30,30áâà2
7700000000014040002
32/2áâà1,32/2áâà4,32/2áâà5,32/2áâà10
7700000000014040003
10,12áâà1,12áâà5,14áâà4,14ª1,14ª2,14ª3
7700000000014040004
3áâà1,3áâà2,3áâà3,7/9áâà1,9áâà1,10áâà1
7700000000014050001
10áâà2,10áâà3,11/5áâà1,11/5áâà4
7700000000014050002
11/5áâà6,13áâà1,14/13áâà3
7700000000014050003
14/13áâà1,14/13áâà2
7700000000014050004
3áâà1,4,7/4áâà14,8,10áâà1,12áâà1
7700000000014060001
12áâà2,14áâà1,14áâà2,14áâà3,16áâà1
7700000000014060002
2,3áâà1,3áâà6,3áâà7,4,5áâà1,5áâà5,6
7700000000014070001
6áâà2,6/13áâà1,7_9áâà1,8,9
7700000000014070002
2áâà3,2áâà5,2áâà6,2áâà7,2áâà8,2áâà18
7700000000014080001
3áâà1,3áâà4,3áâà5
7700000000014080002
1áâà1,1áâà2,1áâà3,1áâà4,3,5ª1,5ª2,7,9
7700000000014090001
9áâà1,11ª1,11ª2,11ª2áâà1,13,15,17,19
7700000000014090002
21,23,23áâà1,23áâà2,23áâà3,25áâà1
7700000000014090003
3áâà1,3áâà2,3áâà4,5,7áâà1,7áâà2,7áâà4
7700000000014100001
7áâà5,7áâà6,13,15,15áâà2,15áâà3,15áâà4
7700000000014100002
17/1áâà1,17,23áâà1,23áâà2,23áâà4
7700000000014100003
23áâà5,23áâà6,25,27,27áâà2,29áâà1
7700000000014100004
29áâà2,29áâà4
7700000000014100005
8,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5,8áâà6
7700000000014100006
8áâà7,8ª2,8_8áâà12,8,8áâà1,8áâà3
7700000000014100007
8áâà4,8áâà5,10/2áâà1,16áâà1,16áâà2
7700000000014100008
16áâà3,16áâà1,16áâà2,18áâà1,18áâà2
7700000000014100009
18áâà3,18áâà4,18áâà5,18áâà6,18áâà7
7700000000014100010
18áâà8,18áâà9,18áâà10,18áâà11,18áâà12
7700000000014100011
18áâà13,18áâà15,18áâà21,18áâà27
7700000000014100012
18áâà29,18áâà30,18áâà31,18áâà35
7700000000014100013
6áâà1,18_20áâà1
7700000000014100014
2_4,3áâà1,7,8
7700000000014110001
3,3áâà3,3áâà6,3_5áâà2,4áâà1,4áâà2
7700000000014120001
4áâà3,4áâà5,6áâà1,6áâà2,6áâà5,8áâà1
7700000000014120002
8áâà2,8áâà3,10áâà1,10áâà2,10áâà3
7700000000014120003
10áâà4,10áâà5,10áâà14,10áâà15,10áâà19
7700000000014120004
4,5/2áâà1,5/2áâà2,6áâà1,6áâà2,6áâà3
7700000000014130001
6áâà4,6áâà5,7,8áâà1,9áâà5,9/1,10áâà1
7700000000014130002
11/2,12áâà1,13,15
7700000000014130003
3áâà1,3áâà2,3áâà3,4áâà1,6,7áâà1,7áâà2
7700000000014140001
7áâà3,9,11áâà1,11áâà2
7700000000014140002
1/8áâà1,1/8áâà2,3,4áâà1,4áâà2,6áâà1,8
7700000000014150001
7700000000014160001
2/10,2/10áâà3,4/1áâà1,6áâà1,8/5áâà1
7700000000014160002
10áâà1,10áâà2,10áâà3,12áâà1,12áâà2
7700000000014160003
12áâà3,12áâà5,14áâà1
7700000000014160004
10,11,11áâà2,13áâà1,20,20áâà1
7700000000014170001
21áâà1,21áâà2,22,22,24,24áâà1,24
7700000000014170002
31áâà1,31áâà2,31áâà4,31áâà5,31áâà6
7700000000014170003
7700000000014170004
7700000000014170005
31áâà16,31áâà20,31áâà21,31áâà23,31áâà24
7700000000014170006
2ª1,2ª1áâà2,2ª2,9,9,11,11áâà2,16,18
7700000000014190001
18áâà2,20ª1,20ª2,22,45,47ª1,47ª2
7700000000014190002
1,1áâà2,3,3áâà2,5,7,7áâà2
7700000000014190003
2/24,3áâà1,3áâà2,3áâà3,4áâà1,6áâà1,8
7700000000014210001
10áâà1,10áâà2,10áâà4,12áâà1
7700000000014210002
1,1áâà2,1áâà3,1áâà4,8,12,15,15áâà1
7700000000014220001
15áâà2,15áâà4,15áâà5,15áâà7,15áâà8
7700000000014220002
15áâà9,15áâà10,15áâà11,15áâà12,15áâà13
7700000000014220003
7700000000014220004
7700000000014220005
15áâà22,15áâà23,15áâà24,15áâà25
7700000000014220006
15áâà26,15áâà27,15áâà28,15áâà29
7700000000014220007
15áâà30,15áâà31,15áâà32,17,19,27
7700000000014220008
1,2,3_5,4_6áâà1,4_6áâà2,7,8_10áâà1
7700000000014250001
8_10áâà2,9,11,11áâà1,11áâà2,11_13áâà3
7700000000014250002
12áâà1,14áâà1,14áâà2,15áâà1,15áâà2
7700000000014250003
17áâà1,18áâà1,18áâà2,19áâà1,20,20áâà2
7700000000014250004
21áâà1,24_26
7700000000014250005
2,2áâà1,2áâà2,3áâà2,3áâà3,4,6áâà1
7700000000014270001
6áâà1,7,8,8áâà1,9,9áâà,9áâà,9áâà
7700000000014270002
9áâà,9áâà,9áâà,9áâà,9áâà,9áâà,15
7700000000014270003
15áâà2,17,19,19áâà2,19áâà3,21/8,25áâà1
7700000000014270004
4,4áâà2,8,10,10áâà2,14,14áâà2,16,18
7700000000014280001
18áâà5,18áâà16,18ª1,18ª2,18ª3,18ª4
7700000000014280002
2,2áâà2,3áâà1,3áâà6,3áâà8,3áâà9,3áâà2
7700000000014290001
4áâà1,4áâà3
7700000000014290002
2,2áâà2,2,3,3áâà2,3áâà3,4,4ª1,4ª1áâà1
7700000000014300001
4ª2,4ª2áâà1,5,5,6,6ª1,6ª2,7,7áâà1
7700000000014300002
7áâà3,8,8ª1,8ª2,8ª2áâà2,10,11,13,19
7700000000014300003
19áâà1,21,23
7700000000014300004
3,5,8áâà1,13
7700000000014310001
4,4áâà1,4áâà2,6,8,10,12,14,16,18,20
7700000000014320001
117647
22,24,24,26ª1,26ª2,26ª2áâà1,26ª3
7700000000014320002
26ª3áâà1,26ª3áâà3,28,28áâà1,30ª1,30ª2
7700000000014320003
32ª1,32ª2,32,32áâà1,34áâà2,34/121
7700000000014320004
34/121áâà1
7700000000014320005
1,7,11,11áâà1
7700000000014320006
3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,3áâà6,4,6
7700000000014330001
1ª1,1ª1áâà1,1ª1áâà2,1ª2,1ª3,1ª3áâà1
7700000000014340001
1ª3áâà2,2áâà1,4áâà1,5,5áâà1,5áâà2,7ª2
7700000000014340002
9áâà3,9ª1,9ª1áâà1,9ª1áâà2,9ª1áâà3,9ª2
7700000000014340003
9ª3,13ª1,13ª1áâà1,13ª1áâà2,13ª3,13áâà1
7700000000014340004
3,7,7áâà1,11,11áâà1,13áâà1,13áâà3
7700000000014350001
13áâà6,13áâà7,13áâà14,13áâà15,13ª2áâà1
7700000000014350002
15áâà1,15áâà2,15áâà3,15áâà4,15áâà5
7700000000014350003
15áâà6,15áâà7,15áâà8,29áâà1,37,37áâà2
7700000000014350004
37áâà3,37áâà4,37áâà5,37áâà6,37áâà8,44
7700000000014350005
48ª1,48ª1áâà1,48ª2,48ª3,50,50áâà1,52
7700000000014350006
56ª2áâà1,56ª2áâà2,57,58,60,60ª1,62
7700000000014350007
62ª1,62ª1áâà1,62ª1áâà2,66
7700000000014350008
1ª1,2/1,4,4ª1,6,8,10ª1,10ª2,12,12ª1,14
7700000000014350009
16,16ª1,18áâà1,18ª1,18ª2,20,20ª1,22ª1
7700000000014350010
22ª2,22ª2áâà2,24,26ª1,26ª2,28,28ª1,30
7700000000014350011
32/2,34/1,36,38,40,40áâà2
7700000000014350012
6,7,7áâà1,7áâà2,7ª1,7ª2,7ª3
7700000000014360001
9áâà1
7700000000014360002
1,2,3,4,5ª1,5ª2,5ª3,5ª4,5ª5,5ª6,5ª7
7700000000014380001
6áâà5,6ª1,6ª2,6ª3,6ª4,7ª1,7ª2,7ª3,7ª4
7700000000014380002
7ª5,7ª6,7ª7,8,8áâà1,8áâà3,8áâà4,8áâà5
7700000000014380003
9ª1,9ª1áâà2,9ª2,10ª2,10ª3,10ª4,11ª1,12
7700000000014380004
13ª1,13ª2,14,14áâà1,14ª2,14ª3,14ª4
7700000000014380005
15ª1,15ª2,15ª3,15,16,16ª2,16ª3,17ª1
7700000000014380006
17ª2,18,18ª1áâà1,18ª2,18ª3,18ª4
7700000000014380007
18ª4áâà2,19ª1,19ª2,19ª3,19ª5,20,22
7700000000014380008
24ª1,24ª2
7700000000014380009
1áâà1,2,4,5áâà1,6,6áâà2,7,8áâà1,9,9
7700000000014390001
10,10áâà1,10,11ª1,11ª2,11ª3áâà2,12
7700000000014390002
13ª1,13ª1áâà1,13ª2,13ª3áâà2,13,14ª1
7700000000014390003
14ª2,14,15ª1,16ª2,16ª2áâà1,17,17áâà1
7700000000014390004
18,18áâà1,18áâà2
7700000000014390005
2ª1,2ª2,2ª3,2,3ª3,3ª4,4áâà3,4ª1
7700000000014400001
4ª1áâà1,4ª2,4ª3,4ª4,4,5,5áâà1,6ª1,6ª2
7700000000014400002
8ª1,8ª2,14/16,18,18,20,21áâà2,21áâà3
7700000000014400003
21ª1,21ª1áâà2,21ª2,22,23ª1,23ª2,23,24
7700000000014400004
24,26,28
7700000000014400005
1/24
7700000000014400006
3,3áâà1,3áâà2,3áâà3,3áâà4,3áâà6,5,9
7700000000014450001
2/5,2/5áâà2,4áâà2,8áâà1,10,12áâà1
7700000000014450002
14áâà4
7700000000014450003
2áâà1,2áâà3,2áâà4,2áâà5,2áâà8,2áâà9
7700000000014460001
2áâà10,2áâà12,2áâà13,2áâà14,2áâà15
7700000000014460002
7700000000014460003
7700000000014460004
2áâà6,2áâà7,2áâà8,2áâà9,4
7700000000014460005
2,3,4,5,6,7,8,9,10,11,12
7700000000014470001
1,1ª1,1,1,3,3áâà2,3áâà3,3áâà4,3áâà5
7700000000014480001
3áâà6,3áâà7,3áâà10,3áâà11,3áâà13
7700000000014480004
3áâà1,3áâà2,3áâà2,3áâà3,3áâà4
7700000000014480006
3áâà5,3áâà6,3áâà7,3áâà8,3áâà9
7700000000014480007
7700000000014480008
3áâà17,3áâà18,3áâà19,5,7,7áâà2
7700000000014480009
7áâà4,7áâà7,7áâà8,7áâà12,7áâà15,7áâà16
7700000000014480010
7áâà17,7áâà18,7ª1,7ª5,7ª6,7ª9,7ª10,9
7700000000014480011
9áâà1,11áâà1,11áâà2,11áâà3,11áâà4
7700000000014480012
11áâà6,11áâà7,11áâà8,11áâà9,11áâà12
7700000000014480013
11áâà13,11áâà21,11áâà24,11áâà25
7700000000014480014
11áâà26,13,13áâà2,13áâà3,13áâà4,13áâà5
7700000000014480015
13áâà5,13áâà5,13áâà6,13áâà7,13áâà8
7700000000014480016
7700000000014480017
7700000000014480018
13áâà17,13áâà20,13áâà21,13áâà22
7700000000014480019
13áâà23,13áâà24,13áâà25,13áâà26
7700000000014480020
13áâà27,13áâà28,13áâà30,13áâà31
7700000000014480021
7700000000014480022
13áâà38,13áâà39,13áâà41,13áâà42
7700000000014480023
13áâà43,13áâà45,13áâà47,13áâà48
7700000000014480024
13áâà50,13áâà52,13áâà54,13áâà62,15,17
7700000000014480025
19,21,21áâà2,23
7700000000014480026
7áâà11,7ª13
7700000000014480002
7700000000014480003
4,6áâà1,6áâà2,8,16,16,18ª1,20,22
7700000000014480027
18ª2
7700000000014480005
2/9áâà3,3,3áâà1,3áâà2,4,5,6,7,7áâà2
7700000000014500001
7áâà3,8,9ª1,9ª2,9ª2áâà2,9,10,10áâà2
7700000000014500002
11,12áâà2,12ª1,13,14,16áâà1,16ª1,16ª2
7700000000014500003
16,17,17áâà1,18,21,21ª3,24,26,28,30ª1
7700000000014500004
30ª2
7700000000014500005
23ª1,23ª1áâà2,23ª2,23ª3,23ª4,25áâà2
7700000000014500006
25ª1,27áâà9,27ª1,27ª2,27ª3,27ª4,27ª5
7700000000014500007
29ª1,29ª2,29ª3,31ª1,31ª1áâà1,31ª2,31ª3
7700000000014500008
32ª1,32ª2,32ª3,33,34,34áâà2,35ª1
7700000000014500009
35ª1áâà3,35ª1,35ª2,36ª1,36ª1áâà4,36ª2
7700000000014500010
36ª3,37,38,38áâà2,39,40ª1,40ª2,41
7700000000014500011
41áâà1,41áâà2,41áâà4,42ª1,42ª2
7700000000014500012
42ª2áâà3,42,43,43ª3,43ª5,43ª5áâà2,44
7700000000014500013
45,45ª1,45ª1áâà1,45ª2áâà1,46,47,47áâà2
7700000000014500014
47ª2,47ª2áâà2,48,49,49,50,51ª1
7700000000014500015
51ª1áâà2,51ª2,51ª3,52,52áâà2,52áâà3,53
7700000000014500016
53áâà2,53,54,54áâà2,54ª3,55,56,56ª2
7700000000014500017
56ª2áâà2,56_,57ª1,57ª2,57ª3,58,58áâà4
7700000000014500018
58ª2,59áâà4,59ª1,59ª2,59ª3,60,60áâà3
7700000000014500019
60ª2,60ª2áâà1,61ª1,61ª2,61,62,63ª1
7700000000014500020
63ª2,64,64áâà2
7700000000014500021
3,3áâà4,3ª1,3ª1áâà2,3ª2,5,7,9ª1
7700000000014510001
9ª1áâà3,9ª1áâà4,9ª2,9ª3,9,11ª1
7700000000014510002
11ª1áâà2,11ª2,11ª2áâà4,11ª3,13ª2,13ª3
7700000000014510003
15,15ª1,15ª1áâà2,15ª1áâà4,15ª2
7700000000014510004
15ª2áâà2,15ª3,17ª1,17ª2,17ª3
7700000000014510005
2ª1,2ª2,4ª1,4ª2,6,6ª1,6ª2,8,10,10ª1
7700000000014510006
123592
10ª2,10ª2áâà3,10ª2áâà4,12ª1,12ª1áâà2
7700000000014510007
12ª2,12ª3,14ª1,14ª2,16,16ª1,16ª2
7700000000014510008
16ª2áâà1,16ª3,18,18áâà1,20,20ª1,20ª2
7700000000014510009
22,22ª1,22ª1áâà2,22ª1áâà3,22ª2
7700000000014510010
22ª2áâà1,24áâà1,24ª3,24ª4,24ª5
7700000000014510011
19,19ª1,19ª2,19ª2áâà2,19ª2áâà3,19ª3
7700000000014510012
21ª,21ª1,21ª2,23,25,25áâà3,25ª1
7700000000014510013
25ª1áâà2,25ª2
7700000000014510014
1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,3ª1
7700000000014520001
3ª2,5,5ª1,5ª2,5ª3,5ª3áâà2,5ª4,5ª4áâà2
7700000000014520002
5ª5,6,6áâà1,6ª2,7ª1,7ª2,7ª3,8áâà1,8ª1
7700000000014520003
8ª2,8ª2áâà1,8ª3,8,9ª1,9ª2,9ª2áâà2,9ª3
7700000000014520004
9,9áâà1,11áâà1,11ª1,11ª2,11ª2áâà1
7700000000014520005
13ª1,13ª2,13ª3,13ª4,13ª7,13ª8,13ª9
7700000000014520006
13ª10,15ª1,15ª2
7700000000014520007
10ª3,10/12ª1,10/12ª2,12ª1,12ª2,12
7700000000014520008
12áâà1,12,12áâà1,12áâà2,14ª1,14ª2
7700000000014520009
14ª3,14ª4,14ª4áâà1,16ª1,16ª2,16ª3
7700000000014520010
17/14,19áâà1,19áâà2,19ª1,19ª1áâà1
7700000000014520011
19ª1áâà2,19ª2,19ª3,21,21ª1,21ª2,21ª3
7700000000014520012
23,23ª1,23ª2,23ª3,25,25áâà1,25ª1
7700000000014520013
25ª1áâà1,25ª2,27,27ª1,27ª2,27ª2áâà1
7700000000014520014
18ª1,18ª3,18ª3áâà1,18ª3áâà2,18ª3áâà3
7700000000014520015
18ª4,18ª5,20áâà1,20áâà2,20,20áâà1
7700000000014520016
22ª1,22ª2,22ª3,22ª3áâà3,22ª4,22ª5,24
7700000000014520017
26,28,28áâà1,28áâà2,28áâà3,28áâà4,28ª1
7700000000014520018
28ª2,28,29ª1,29ª2,29,30,30áâà1,31ª1
7700000000014520019
31ª2,33áâà1,33ª1,33ª1áâà2,33ª2,33ª3
7700000000014520020
35ª1,35ª2,35ª2áâà1,35ª2áâà2,37ª1,37ª2
7700000000014520021
39ª1,39ª2
7700000000014520022
7,9,9áâà2
7700000000014530001
1,2ª1,2ª2,2ª3,3,4,5,7,9,11,11áâà1,11
7700000000014550001
11áâà1,11áâà17,11
7700000000014550002
7700000000014560001
9,9áâà2,18,18áâà7,18áâà10,18áâà11
7700000000014560002
20áâà1,28
7700000000014560003
4,6,6áâà1,6áâà2,6áâà4,6áâà5,6áâà6,9
7700000000014570001
9áâà2,11,11áâà2,13,15,15áâà,15áâà2
7700000000014570002
18,20ª1,20ª1áâà1,21,22,23,24ª1,24ª2
7700000000014570003
24ª2áâà2,24ª3,25,25áâà2
7700000000014570004
11,11áâà1,11áâà2,11áâà3,11áâà4
7700000000014580001
117036
11áâà5,15,17,17áâà1,19,19ª1,21,21ª1
7700000000014580002
14ª1,14ª1áâà1,14ª2,14ª3,14ª3áâà1,16ª1
7700000000014580003
117218
16ª2,16ª2áâà1,16ª3,16ª4,18ª1,18ª3,20
7700000000014580004
24,24áâà1
7700000000014580005
13ª1,13ª2,22,22ª1,26/22,26/22áâà1
7700000000014580006
1,3,4ª1,4ª2,4ª3,5,5ª1,5ª1áâà1,5,6ª1
7700000000014580007
6ª2,6ª3,6ª3áâà1,6ª3áâà2,7ª1,7,8ª1,8ª2
7700000000014580008
8ª3
7700000000014580009
3,4áâà1,4áâà2,6áâà1,6áâà2,45ª1
7700000000014610001
45ª1áâà1,45ª2,45,47ª1,47ª1áâà1,47ª2
7700000000014610002
47,49ª1,49ª1áâà1,49ª2,49ª3,49,49
7700000000014610003
49áâà2
7700000000014610004
8,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5
7700000000014610005
8áâà6,51ª1,51ª1áâà1,51ª2,53ª1
7700000000014610006
53ª1áâà2,53ª2,53ª3,55ª1,55ª1áâà2,55ª3
7700000000014610007
55ª4,57ª1,57ª2,57ª3,57ª3áâà1,57,59
7700000000014610008
59áâà2,59,61ª1,61ª1áâà3,61ª2,61ª3
7700000000014610009
63ª1,63ª2,65ª1,65ª2,67ª1,67ª1áâà3,67ª2
7700000000014610010
69áâà1,69ª1,69ª1áâà1,71ª1,71ª1áâà2
7700000000014610011
71ª3,71ª4,71áâà1,73ª1,73ª1áâà2,73
7700000000014610012
75ª1,77ª1,77ª2,77ª2áâà1
7700000000014610013
6ª1,6ª1áâà1,6ª2,6ª3,6ª3áâà1,6ª3áâà2
7700000000014620001
1ª1,1ª2,1ª1,1ª1áâà3,1ª2,1ª3
7700000000014620002
1ª3áâà1,1,3áâà1,3áâà2,3áâà3,3ª1,5,7
7700000000014620003
9,9áâà1,9ª1,11áâà1,11ª1,11ª1áâà2,11ª2
7700000000014620004
13áâà1,13áâà2,13áâà3,13áâà3
7700000000014620005
8,8áâà1,10ª1,10ª2,10ª3,10ª4,10ª4áâà1
7700000000014620006
10ª4áâà2,16,18,20,22,24,26,26áâà2,28
7700000000014620007
1,1áâà2,1áâà3,2ª1,2ª1áâà1,2ª2,2ª3,2ª4
7700000000014630001
2ª5,2,4/6,6ª1,6ª1áâà1,6ª2,6ª2áâà1,6ª3
7700000000014630002
6ª3áâà1,11ª1,11ª2,11ª3,13,15
7700000000014630003
3,3áâà1,3,5,5áâà2,5áâà4,7,9
7700000000014630004
8,8áâà1,10,10áâà1,12ª1,12ª2,14,16
7700000000014630005
16áâà1,16áâà2
7700000000014630006
7700000000014640001
7700000000014640002
áâà14,áâà15,áâà16,áâà18,áâà19,áâà20
7700000000014640003
áâà21,áâà22,áâà24,áâà25,áâà26,áâà29
7700000000014640004
áâà30,áâà31,1,2áâà5,5,5áâà1,5áâà2
7700000000014640005
5áâà3,5áâà4,5áâà7,5áâà8,5,5áâà2
7700000000014640006
7,8,8áâà2,8áâà6,8,11,11áâà1,11áâà2
7700000000014640007
12,14,14áâà1,14áâà3,14áâà4,14áâà5
7700000000014640008
14áâà6,14áâà7,14áâà8,14áâà9,14áâà13
7700000000014640009
14áâà15,14áâà16,14áâà17,14áâà18
7700000000014640010
14áâà19,14áâà20,14áâà22,14áâà23
7700000000014640011
14áâà24,14áâà25,14áâà28,14áâà29
7700000000014640012
14áâà35,14áâà36,14áâà46,14áâà47
7700000000014640013
14áâà48,14áâà49,19,19áâà1,19áâà2
7700000000014640014
19áâà3,19áâà4,19áâà5,19áâà7
7700000000014640015
19áâà8,19áâà9,19áâà10,19áâà11
7700000000014640016
19áâà12,19áâà13,19áâà14,19áâà15
7700000000014640017
19áâà16,19áâà17,19áâà18
7700000000014640018
21,21áâà1,23,23,25
7700000000014640019
16,18,18,20,20,22,22áâà2,24,27
7700000000014640020
1,2,2,32/40áâà1
7700000000014650001
6ª1,6ª2,6ª2áâà3,6ª1,6ª2,6
7700000000014680001
117208
13,13áâà2,15,15áâà2,15áâà3,15,15
7700000000014680002
15áâà2,17,17ª1,17ª1,17ª1,17ª2
7700000000014680003
17ª2áâà4,19ª1,19ª2,19ª2áâà3,19,22
7700000000014680004
22áâà1,22áâà2,22áâà3,22ª2áâà2,22
7700000000014680005
22áâà3,22áâà4,22,24,24ª1,24ª1áâà2
7700000000014680006
24ª1áâà3,24ª2,24ª3,24ª4,24,28,28ª1
7700000000014680007
28ª1,28ª2,28ª3,28ª3áâà1,28,28,30
7700000000014680008
30áâà2,30,32,32ª1,32ª2,32ª2áâà2,32ª3
7700000000014680009
21,21ª1,21ª1áâà2,21ª1áâà3,21
7700000000014680010
7700000000014680011
117534
23,23áâà2,23áâà3,23áâà4,23,23áâà1
7700000000014680012
23áâà2,23ª1,23ª1áâà1,23ª1áâà2,25ª1
7700000000014680013
25ª1áâà2,25ª2,25ª2áâà2,25ª2áâà3,38ª1
7700000000014680014
38ª1áâà2,38ª1áâà3,38,38áâà2,40ª1
7700000000014680015
40ª2,42,42ª1,42ª1áâà2,42ª2,42ª3,42
7700000000014680016
42,42áâà2,42,44ª1,44ª1áâà2,44ª2,44
7700000000014680017
1,1áâà1,1áâà2,2,2áâà2,3,3,4ª1,4ª1áâà5
7700000000014680018
4ª1áâà6,4ª2,4ª3,4ª3áâà2,4ª3,4ª4,5,5
7700000000014680019
7,8ª1,8ª2,8ª2áâà3,8ª3,8ª4,8ª4áâà2
7700000000014680020
32ª3áâà1
7700000000014680021
8ª4áâà3,8ª5,8ª5áâà2,8ª6,8,8,8,9ª1
7700000000014680022
9ª1áâà7,9ª1áâà8,9ª2,9ª2áâà2,9ª2,9ª2
7700000000014680023
9ª2,9ª3,9ª3áâà1,9ª3áâà2,9ª4,9ª4áâà2
7700000000014680024
9ª4áâà3,9ª4áâà5,9ª4áâà6,9ª4áâà7
7700000000014680025
9ª4áâà8,9ª4áâà9,9ª4áâà10,9ª4áâà11
7700000000014680026
9ª4áâà12,9ª4áâà13,9ª4áâà14,9ª4áâà15
7700000000014680027
11,11áâà1,11áâà2,11áâà3,11áâà5,11,11
7700000000014680028
11,13,16ª1,16ª1áâà3,16ª1áâà4,16ª2
7700000000014680029
16ª3,18,18ª1,18ª1áâà4,18ª2,18ª2áâà2
7700000000014680031
18ª3,18ª4,20ª1,20ª2,20ª2áâà2,20ª2áâà3
7700000000014680032
20ª3,20ª4
7700000000014680033
3ª1,3ª1áâà2,3ª2,3ª2áâà2,3
7700000000014690001
3,6,6áâà1,6áâà2,6áâà3,6áâà4,6áâà10,7
7700000000014710001
7áâà3,7áâà4,8,9,9áâà2,9áâà4,12,14
7700000000014710002
14áâà2,18,18áâà1,18áâà4,20,20áâà2
7700000000014710003
20áâà3,20áâà4,20áâà5,20áâà6,21,21áâà6
7700000000014710004
21áâà7,21áâà8,21áâà9,21áâà10,21ª1,21ª2
7700000000014710005
21ª3,21ª4,22,22áâà2,22áâà3,22áâà4
7700000000014710006
22áâà5,22áâà5,22áâà6,22áâà7,22áâà9
7700000000014710007
22áâà10,22áâà11,22áâà12,22áâà13,29
7700000000014710008
32,32áâà22,32ª2,32ª3,32ª4,32ª5,32ª7
7700000000014710009
32ª8,32ª9,32ª10,32ª12,32ª13,32ª14
7700000000014710010
32ª23,32ª24,32ª25,33,34,34áâà1
7700000000014710011
34áâà2,34áâà4,34áâà5,34ª1,34ª2
7700000000014710012
34ª4,35,35áâà1,35áâà2,35áâà3,35áâà4
7700000000014710013
35áâà18,35áâà28,35áâà28,35áâà30,41
7700000000014710014
41áâà2,41áâà3,41áâà7,41áâà8,41áâà9
7700000000014710015
41áâà10,41áâà14,41áâà15,41áâà16
7700000000014710016
41áâà17,41áâà18,41,43,43áâà2,43áâà3
7700000000014710017
43áâà4,43áâà5,43áâà6,43áâà7,43áâà8,47
7700000000014710018
49,50,50áâà2,50ª2,50,51
7700000000014710019
2,2áâà1,2áâà2,2áâà4,2áâà5,2áâà6,2áâà7
7700000000014720001
2áâà10,4,4áâà2,4áâà3,4áâà4,4áâà5,4áâà6
7700000000014720002
4áâà8,14,15,15áâà2,17,17,17áâà1
7700000000014720003
7700000000014720004
7700000000014720005
17áâà10,17áâà11,17áâà12,17áâà13
7700000000014720006
22,26
7700000000014720007
3áâà2,5áâà1,5áâà3,7áâà1,7áâà2,12áâà1
7700000000014730001
12ª3,13/15áâà1,13/15áâà2,14áâà1
7700000000014730002
17/15áâà1
7700000000014730003
1/9,3áâà1,3áâà2,4áâà2,4áâà3,4ª1,5áâà1
7700000000014740001
5áâà2,6áâà1,6áâà2,6ª1
7700000000014740002
1,1áâà2,3áâà1,3áâà2,5,5áâà1
7700000000014760001
4áâà1,4áâà3,6áâà1,6áâà2,8/2áâà2
7700000000014770001
3,5áâà1,7áâà1,7áâà2
7700000000014770002
1/13áâà4,1/13áâà8,2/15áâà2,3áâà1
7700000000014780001
3áâà1,3áâà2,3áâà3,3áâà4,5/6áâà2
7700000000014780002
5/6áâà3,5/6áâà10,5/6áâà14,5/6áâà20,7/10
7700000000014780003
17ª1,17ª1áâà2,17ª2,19ª1,19ª2,21
7700000000014800001
13,13ª1,13ª2,13ª3,13ª3áâà2,13ª4,13ª5
7700000000014800002
15,15áâà2,23,23áâà2,23ª2,23ª2áâà2,25ª1
7700000000014800003
2,2áâà2,2áâà3,3,3áâà2,4,5,6,6áâà2,6ª2
7700000000014800004
7,7ª2,8ª1,8ª2,8ª3,9ª1,9ª2,10ª1,10ª2
7700000000014800005
10ª3,12,16,18,20ª1,20ª1áâà2,20ª2,20ª3
7700000000014800006
20ª3áâà2,22,24,26,28,28
7700000000014800007
1áâà1,4,4áâà2,5,7/11,8,9,10,10áâà2
7700000000014810001
10áâà3,12,13áâà1,14,15,16,17,17áâà2
7700000000014810002
18áâà1,19,20,21,22,22áâà2,22áâà4,24,26
7700000000014810003
26áâà2
7700000000014810004
10áâà1,10áâà2,10áâà3,12áâà1,12áâà4
7700000000014820001
7700000000014820002
12áâà11,12áâà12,12áâà14,12áâà15
7700000000014820003
12áâà16,12áâà17,12áâà18,14
7700000000014820004
1áâà1,1áâà2,1áâà3,2,3áâà2,6
7700000000014820005
7700000000014820006
7700000000014830001
2áâà8,2áâà9,2ª1,2ª2,2áâà1,3,3áâà1
7700000000014830002
3áâà2,3ª1,3,4ª1,4ª1áâà1,4ª1áâà2,4ª2
7700000000014830003
4ª2áâà3,4ª3,5,5áâà2,6,6áâà2,6áâà5
7700000000014830004
8áâà1,8áâà2,8áâà3,8áâà4,8,8áâà1,8,9
7700000000014830005
9áâà2,11,13,15,15áâà2,17,19,19áâà2,20
7700000000014830006
10áâà2,10ª1,10ª2,10ª3,10ª4,12,12áâà2
7700000000014830007
21,22,24
7700000000014830008
18ª2áâà1,20
7700000000014830009
7700000000014840001
1ª1,2áâà1,2áâà2,3,3áâà2,3áâà2,3áâà3,4
7700000000014850001
6ª1,6ª2,8,8ª1,8ª1áâà2,8ª2,8,8,10ª1
7700000000014850002
10ª1áâà2,10ª1áâà3,10,10,10
7700000000014850003
5,5ª1,5ª1áâà1,7áâà2,7ª2,7ª2áâà2
7700000000014850004
7ª2áâà3,7ª2áâà4,7ª4,7,9áâà3,9ª2
7700000000014850005
9ª2áâà2,9ª5,13,15,17,17áâà1,17áâà2,19
7700000000014850006
19,21ª1,21ª1áâà1,21ª1áâà2,21ª2,21
7700000000014850007
29ª1,29ª1áâà1,29ª1áâà3
7700000000014850008
11ª1,11ª2,11ª2áâà2,11ª3,11ª3áâà1,11ª4
7700000000014850009
12áâà1,26,28,30ª1,30ª2,30ª3,32,32áâà1
7700000000014850010
32áâà4,32áâà5,32ª1,32ª2,32ª3,32áâà1
7700000000014850011
2,2áâà2,2,4,8áâà7,10,12áâà1
7700000000014860001
12áâà17,14/27áâà1,18áâà1,20,22
7700000000014860002
24áâà1,24áâà19,26,28ª1,28ª2,28ª3,28ª4
7700000000014860003
4ª1,4ª2
7700000000014870001
3,8áâà1,8áâà2,8áâà5,8áâà7,15,16,16áâà3
7700000000014870002
18,20,20áâà2,20áâà3,26áâà1,26áâà2
7700000000014870003
1áâà1,1áâà3,1áâà1,1áâà2,2,2áâà2
7700000000014880001
3áâà1,5,5áâà3,6,7áâà1,7áâà2,8áâà2
7700000000014880002
8áâà3,8/4áâà1,10áâà1,10áâà2,11/13áâà1
7700000000014880003
11/13áâà2,13áâà1,13áâà2,13áâà3,13áâà9
7700000000014880004
13áâà10,15áâà1,15áâà2,15áâà3,15áâà4
7700000000014880005
15áâà7,15áâà8,15áâà9,17áâà1,17/14áâà2
7700000000014880006
19áâà2,19áâà3,19áâà6,21áâà1
7700000000014880007
14,14áâà2,14áâà3,14ª1,14ª1áâà2,16
7700000000014880008
16áâà1,16áâà4,18,18áâà2,20,20áâà1
7700000000014880009
7700000000014880010
7700000000014880011
20áâà12,20áâà13,20áâà16,20áâà19
7700000000014880012
20áâà29,20,20áâà1,22,24,26,26ª1
7700000000014880013
4,5,5ª1,6,6áâà1,6áâà5,6áâà6,6áâà7
7700000000014890001
7700000000014890002
6áâà13,6áâà15,6áâà16,6áâà17,8,10,10áâà2
7700000000014890003
1,1,1áâà1,2,3,4,4,6,7,7áâà11,7ª1,7
7700000000014900001
7,8,10/11,12,12áâà2,12áâà5,12áâà6
7700000000014900002
12áâà7,12áâà8,12áâà9,12áâà10
7700000000014900003
1,1ª1,1
7700000000014910001
7700000000014920001
1,3,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000014930001
4áâà6,4áâà6,4áâà6,4áâà7,4áâà8,4áâà9
7700000000014930002
4áâà10,4áâà18,4/5áâà5
7700000000014930003
1/7,3,3áâà5,3áâà8,9,11,11,13,15,17
7700000000014940001
17áâà2,19ª1,19ª2,19ª3
7700000000014940002
9,9áâà2
7700000000014950001
áâà1,áâà2,10,12áâà1,12áâà2,12áâà3
7700000000014950002
12áâà4,12áâà7,12áâà8,12áâà11,12áâà12
7700000000014950003
12áâà14,12,15ª1,15ª2,15ª3,15ª4,18áâà1
7700000000014950004
18áâà2,23,23áâà2,23,25,25áâà1,25áâà3
7700000000014950005
25áâà4,25áâà5,25áâà6,25áâà7,25áâà8
7700000000014950006
25áâà9,25áâà10,25áâà11,25áâà12,27áâà1
7700000000014950007
27áâà2,27áâà3,27áâà4,29,29áâà1,29áâà2
7700000000014950008
29áâà3,29áâà4,29áâà5,29ª1,29ª2áâà2
7700000000014950009
29ª2áâà3,29ª2áâà4,29ª2áâà6,29ª2áâà7
7700000000014950010
29ª2áâà8,29ª2áâà9,29ª2áâà10,29ª2áâà11
7700000000014950011
29ª2áâà13,29ª2áâà15,29ª2áâà16
7700000000014950012
29ª2áâà18,29ª2áâà19,29ª5,29ª5áâà1,29ª6
7700000000014950013
29ª6áâà1,29ª6áâà2,29ª6áâà3,29ª6áâà4
7700000000014950014
29áâà1,31,33áâà1,33áâà2,33áâà4
7700000000014950015
2,3,4,4áâà2,7
7700000000014960001
8/18,10áâà1,10áâà2,11áâà1,11áâà2,12,13
7700000000014960002
14,16/3
7700000000014960003
1,1áâà2,5
7700000000014970001
18,26/29,29áâà1,30,31áâà1,31áâà2,34
7700000000014980001
34áâà1,34áâà2,35áâà1,37,38,39,48
7700000000014980002
7700000000014990001
105175
3/2,4áâà1,4áâà2,4áâà4,5áâà1,5áâà2,7
7700000000014990002
7áâà2,8,8áâà1,8áâà11,9áâà1,10áâà1
7700000000014990003
10áâà2,10áâà3,11áâà1,11áâà2,11áâà4
7700000000014990004
11áâà6,12,13/17,14
7700000000014990005
3,3,4áâà1,6,6áâà3,8,10
7700000000015000001
1,2,3,4,5,5áâà2,5áâà3,6,6áâà5,7,8
7700000000015010001
áâà4,2ª1,2ª1áâà1,2ª2,2,4ª1,4ª2,4ª3
7700000000015020001
4ª4,4,4áâà1,6,6áâà1,6áâà2,8,8áâà1,11
7700000000015020002
11áâà1,11áâà2
7700000000015020003
2,3,4,4ª1,4ª1áâà1,5,5áâà1
7700000000015030001
119361
3áâà4,5,7ª1,7ª2,7ª3,7ª4,7ª5,7ª6
7700000000015040001
7ª6áâà1,7ª7,7ª7áâà2,7ª8,7ª8áâà1
7700000000015040002
1,1áâà2,2ª1,2ª2,2ª2áâà1,2áâà1,2áâà2
7700000000015050001
2áâà3,2áâà4,2áâà5,2áâà6,2áâà7
7700000000015050002
2áâà8,2áâà9,2áâà10,2áâà11,2áâà12
7700000000015050003
2áâà13,2áâà14,2áâà15,2áâà17
7700000000015050004
2áâà20,3,3áâà1,3áâà2,3áâà3,3áâà4
7700000000015050005
7700000000015050006
3áâà12,3áâà17,3áâà18,3áâà23,3áâà25
7700000000015050007
3áâà26,3áâà29,3áâà30,3áâà1,3áâà2,14
7700000000015050008
7700000000015050009
2,2ª1,3áâà2,5áâà1,6áâà1,7áâà1,8áâà1
7700000000015060001
9áâà1,9áâà2,9áâà3,9áâà5,9/10áâà1,10,11
7700000000015060002
12,15,16,16áâà1,17,19/22áâà1,19/22áâà2
7700000000015060003
6,6áâà2,6áâà3,6áâà4,6ª1,6ª2,6ª3,8,10
7700000000015070001
10áâà2,12,14,14áâà2,14ª2,14ª2áâà2,14
7700000000015070002
16,18,18áâà2,18áâà3,18áâà4,20,22
7700000000015070003
22áâà2,22ª2,24ª2,26ª1,26ª2,26ª2áâà3
7700000000015070004
26ª3,26
7700000000015070005
áâà1,áâà3,áâà4,1,1áâà2,2,2áâà2,2áâà3
7700000000015080001
2áâà4,3,3áâà2,5,5áâà2,5áâà3,5áâà4,5ª2
7700000000015080002
5ª2áâà2,5ª3,5,7,7áâà2,8/25áâà1,9
7700000000015080003
7700000000015080004
9ª2,10,10áâà3,10áâà4,11,13,13áâà2
7700000000015080005
13áâà4,15,15ª1,15ª2,15ª3,17,17ª3,19
7700000000015080006
19áâà2,19áâà3,19ª2,21,21áâà3,21ª1,21ª2
7700000000015080007
21ª3,23,23áâà2,23áâà3,23ª2,25,25áâà2
7700000000015080008
27,27áâà2,27ª1,27ª2,27,33
7700000000015080009
3áâà2,3áâà3,3áâà4,3áâà7,4áâà1,4áâà2
7700000000015090001
4áâà3,4áâà4,5áâà1,5áâà2,5áâà3,5áâà4
7700000000015090002
5áâà5,5áâà6,6áâà2,6áâà3,6áâà4,6áâà5
7700000000015090003
6áâà6,6áâà7,6áâà23,7áâà2,7áâà3,8áâà1
7700000000015090004
8áâà2,9áâà1,9áâà1,10/7áâà2,10/7áâà3
7700000000015090005
10/7áâà4,10/7áâà5,10/7áâà8,11áâà1
7700000000015090006
11áâà2,13áâà1,14áâà1,14/5áâà1
7700000000015090007
1áâà1,1áâà2,1áâà3,1áâà4,2,3,4,6,7,8
7700000000015100001
8áâà2,9,11,13,14,16áâà1,16ª3,17,18
7700000000015100002
18áâà1,19,20áâà1,21,22,23,24,25
7700000000015100003
26áâà1,27áâà1,28,29,31,32,33,34,35,36
7700000000015100004
37,38,39,41,42,43,45,46,47,47áâà2,48
7700000000015100005
2áâà3,2áâà4,2áâà5,2áâà6,2ª1,2ª2,2ª3
7700000000015150001
2ª3áâà2,2ª5,2ª5áâà1,2ª6,2ª6áâà1,2,2
7700000000015150002
7700000000015150003
4áâà7,8,8áâà2,8áâà3,8áâà5,8áâà6,8áâà7
7700000000015150004
8áâà9,8áâà10,8áâà11,8áâà13,8áâà14
7700000000015150005
8áâà15,8áâà16,8áâà24,8áâà28,8áâà31
7700000000015150006
8áâà32,8áâà33,8áâà42,8áâà45,8áâà49
7700000000015150007
8áâà50,10,12áâà1,12áâà2,12áâà3,12áâà4
7700000000015150008
12áâà5,12áâà6,12áâà7,12áâà8,12áâà9
7700000000015150009
12áâà17,12áâà24,14,14áâà1,14áâà2
7700000000015150010
7700000000015150011
7700000000015150012
14áâà13,14áâà14,14áâà15,18áâà1
7700000000015150013
18áâà2,18áâà3,18áâà4,18áâà5
7700000000015150014
18áâà6,18áâà7,18áâà8,18áâà9,18áâà10
7700000000015150015
áâà41,1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà9
7700000000015150016
1áâà10,1,5,7áâà1,7áâà1,7áâà2,7áâà3
7700000000015150017
7700000000015150018
7áâà10,7áâà11,7áâà13,7áâà19,7áâà22
7700000000015150019
7áâà23,7áâà24,7áâà25,7áâà34,7áâà35
7700000000015150020
7áâà41,7ª1áâà36,9,9,11,13
7700000000015150021
1,1,1,1áâà2,1,1,3,3ª1,3ª1áâà1,3
7700000000015160001
3,3áâà2,5,5ª1,5ª1áâà1,5,5,5,6,7
7700000000015160002
7,7áâà1,7áâà2,7,7,7,8,9,9áâà1,9
7700000000015160003
10,11,11,11,11,12,13,13,14,14,16
7700000000015160004
18,18,20,20,22,22áâà2
7700000000015160005
7,7ª2,7ª2áâà1,9ª1,9ª2,11/7,13/4,16
7700000000015170001
16ª1,18/5,20áâà1,20/2
7700000000015170002
15áâà1,22ª1,22ª1áâà2,22ª1áâà3,22ª2,24
7700000000015170003
26,26áâà2,26áâà3,26áâà4,26ª2,26ª2áâà1
7700000000015170004
26ª2,28,28áâà1,28áâà2,28áâà3,28áâà4
7700000000015170005
28áâà5,30,32/5,34/6
7700000000015170006
2ª1,2ª2,2,3ª1,3ª2,4,4ª1,5,5áâà2,5ª2,6
7700000000015170007
6áâà3,8,12áâà2,12ª2,14,14ª2,14ª2áâà1
7700000000015170008
21/2,33áâà1,33ª2,36,38,38áâà1,38áâà2
7700000000015170009
38áâà3,40,40áâà1,42,42áâà2,46,46áâà2
7700000000015170010
46,46áâà1,48/5,52,54áâà4,54ª1
7700000000015170011
54ª1áâà1,54ª1áâà2,54ª1áâà3,54ª2,54ª3
7700000000015170012
9,19,24
7700000000015180001
1/5,2áâà1,2áâà2,2áâà3,3,4áâà1,4áâà3
7700000000015190001
119004
4áâà4,5áâà1,5áâà2,6,6áâà1,6áâà2,7
7700000000015190002
8áâà1,8áâà2,9áâà1,9áâà2,9áâà3,9áâà4
7700000000015190003
9áâà6,9,9áâà2,10áâà1,10áâà2,10áâà3
7700000000015190004
10áâà4,11,11áâà1,11áâà2,11áâà3,11
7700000000015190005
12áâà3,12áâà4,12áâà5,13áâà1,13áâà3
7700000000015190006
14ª1,15áâà2,15/2,16áâà1,16áâà2,17áâà1
7700000000015190007
17áâà1,17áâà2,17áâà3,17áâà4,17áâà5
7700000000015190008
17áâà7,17áâà9,17áâà10,18,19áâà1,19áâà2
7700000000015190009
20áâà1,21áâà2,23áâà1,23áâà2,23áâà4
7700000000015190010
23,24,25áâà1,25áâà1,27,27áâà2,28áâà1
7700000000015190011
28áâà2,28áâà3,28áâà4,29/18,30áâà1
7700000000015190012
30áâà2,31áâà1,31áâà2,32,32áâà1,32áâà2
7700000000015190013
33áâà1,33áâà2,33áâà3,34áâà3,34áâà6
7700000000015190014
36áâà1,36áâà4,38,40áâà1,40áâà2,40áâà3
7700000000015190015
42,44,46,48
7700000000015190016
7700000000015220001
141431
1,2áâà1,2áâà2,2áâà3,2áâà4,3,3áâà3,4
7700000000015260001
5/2,6,14/1ª1,14/1ª2,14/1ª3,16/2áâà1
7700000000015260002
16/2áâà3,16/2áâà5,16/2áâà6,16/2áâà8
7700000000015260003
16/2áâà9,16/2áâà10,16/2áâà11,16/2áâà12
7700000000015260004
16/2áâà13,16/2áâà14,16/2áâà16,18áâà1
7700000000015260005
18áâà2,18áâà3,20áâà7,20ª4,22,22áâà1
7700000000015260006
22áâà2,22áâà2,22áâà3,22áâà4,24áâà1
7700000000015260007
24áâà2,26
7700000000015260008
40,40áâà3,42áâà1,42áâà2,42áâà3,44
7700000000015260009
46áâà39,46ª1,46ª2,46ª3,48
7700000000015260010
7áâà1,7áâà2,7/3áâà2,9,9,11,13,13áâà2
7700000000015260011
119146
13,15áâà1,15áâà2,17,17áâà2,17áâà11
7700000000015260012
17ª10,17,19,19,21áâà2,21áâà4,21/10
7700000000015260013
23/7,23/7ª2,25áâà4,25áâà26,25áâà27
7700000000015260014
25áâà29,25áâà30,25ª1,25ª2,25ª3,27áâà1
7700000000015260015
27áâà2,27áâà3,27áâà4,27áâà5,27áâà6,27
7700000000015260016
28,28áâà1,29,30,30áâà2,31,31áâà2,32
7700000000015260017
32áâà1,32ª2,33/11,34,34áâà2,35,35áâà1
7700000000015260018
36,38/16
7700000000015260019
41,41áâà2,43áâà1,43áâà2,45,45áâà1
7700000000015260020
119270
45áâà2,47,47,49,49áâà1
7700000000015260021
2/5,4áâà2,4ª1,4ª2,4ª2áâà2,4ª2áâà3
7700000000015270001
6áâà2,6ª1,6ª1áâà1,6ª2
7700000000015270002
3,5,7,8ª1,8ª2,8áâà1,8áâà2,8áâà3
7700000000015270003
8áâà4,8áâà5,8áâà6,8áâà7,9,9áâà1
7700000000015270004
9áâà2,10,11,12áâà3,12áâà4,12ª1,12ª2
7700000000015270005
12ª2áâà1,12,13,13,15,15áâà2,15áâà3
7700000000015270006
7700000000015270007
3,3áâà2,4áâà1,4ª2,4ª3,5,6,7,8áâà1
7700000000015280001
10áâà1,12áâà1,14áâà1
7700000000015280002
8,10,10áâà2
7700000000015290001
1,1,2,3,3áâà2,4,5,6,6,7áâà1,7áâà2
7700000000015300001
7áâà3,7áâà6,7áâà7,8,9,9áâà1,9ª2
7700000000015300002
9ª2áâà2,10,12,14
7700000000015300003
1,2,3,3áâà1,4ª1,4ª2,5,6,6áâà2,6ª1,7
7700000000015310001
8ª1,8ª2,8ª3,9,10,11,11áâà1,12,13,14
7700000000015310002
14áâà2,16
7700000000015310003
3,4,4,4,4áâà2,4áâà3,4áâà4,5,5,6
7700000000015320001
127560
6,7,8,8áâà2,8,8,8,8,9,9áâà1,9áâà2
7700000000015320002
10,10,11,11,11,11,11áâà1,12
7700000000015320003
12áâà1,12áâà2,12,12áâà1,12áâà2,12
7700000000015320004
13,13áâà2,13áâà3,13áâà4,14,15,15áâà2
7700000000015320005
15ª1,15,15,16,17,18,19,19,19áâà1
7700000000015320006
4,12
7700000000015330001
7700000000015340001
7700000000015340002
129243
1,2,2áâà3,2áâà4,3,3áâà2,4,5,6,7,8,10ª1
7700000000015340003
10ª2,12,14,14ª2,14ª2áâà1,16,18,20
7700000000015340004
20áâà1,20ª1,22,24ª1,24ª1áâà1,24ª2,26
7700000000015340005
28,30,32ª1,32ª2,34ª1,34ª2,34ª2áâà2
7700000000015340006
26,28,28áâà2,29áâà1,30,30áâà3,31áâà1
7700000000015350001
31áâà2,31áâà3,32,32áâà2,34áâà1
7700000000015350002
27
7700000000015360001
7700000000015370001
3áâà1,3áâà2,3áâà3,3áâà7,5,5áâà2,5áâà3
7700000000015390001
7áâà1,7áâà2,9
7700000000015390002
4,4áâà3,6,6áâà2,8,10,10ª1,10ª2,10áâà2
7700000000015390003
12áâà6,12ª1,12ª2,14ª1,14ª2,14ª3,14ª4
7700000000015390004
7700000000015390005
14áâà5,14áâà6,16,16áâà2,16áâà3
7700000000015390006
7700000000015390007
16áâà9,16áâà10,16,16áâà2,16áâà3
7700000000015390008
16áâà4,16áâà5,16áâà6,16áâà1
7700000000015390009
3,4,6áâà3,6ª1,6ª2,7,7áâà2
7700000000015400001
3,14,14,16,16áâà1,16áâà2,16,18,20,22
7700000000015420001
22,22,24,24áâà1,24áâà2,24,26,27
7700000000015420002
27áâà5,27áâà6,27áâà7,28,28áâà1,28ª2
7700000000015420003
28,28,28,30,30áâà1,30,31,32
7700000000015420004
32áâà2,32,33,33áâà1,33áâà2,33,34,35
7700000000015420005
36,36,36áâà1,36,36,37,37áâà2,37
7700000000015420006
37,38,38,38,38áâà2,39,40,40áâà1
7700000000015420007
40,41,41áâà1,41áâà2,41,42,42,43,44
7700000000015420008
46,46áâà1,46áâà2,47,47áâà2,47,48,48
7700000000015420009
48áâà2,49,49áâà1,50,50áâà2,50,51,51
7700000000015420010
52,52áâà1,52áâà2,52áâà3,52,53,53áâà1
7700000000015420011
54,54áâà1,54,55,55áâà1,55áâà2,55,56
7700000000015420012
58,58áâà1,58,58áâà1,58,58,58,59,59
7700000000015420013
14,16,18,20,21,21áâà1,21áâà2,21áâà3
7700000000015450001
21áâà4,21áâà5,21áâà6,21áâà7,21áâà8
7700000000015450002
21áâà9,21áâà10,21áâà11,21áâà12,21áâà13
7700000000015450003
21áâà14,21áâà15,21áâà16,22,22áâà2,24
7700000000015450004
25,26,26,28ª1,28ª2,28ª2áâà1,28ª3,30
7700000000015450005
30,32,32áâà1,34,34áâà1
7700000000015450006
12áâà5,23áâà1,23áâà2,23áâà3
7700000000015450007
12,12áâà1,12áâà4,12,12,15áâà3,15áâà4
7700000000015450008
15áâà5,15áâà6,15áâà18,15ª1,15ª2,19
7700000000015450009
19áâà1,19áâà2,19
7700000000015450010
1,2,3,3,4ª1,4ª1áâà1,4ª1áâà2,4ª2
7700000000015450011
4ª2áâà1,4ª3,4ª4,4,5,5áâà1,6ª1,7ª1,7ª2
7700000000015450012
7ª3,7ª4,8ª1,8ª1áâà1,8ª1áâà2,8ª2
7700000000015450013
8ª2áâà1,8ª2áâà2,8ª3,8,8,9ª1,9ª1áâà1
7700000000015450014
9ª2,9ª2áâà2,9ª3,9ª4,9ª5,10,10áâà1,11
7700000000015450015
11áâà1,13áâà1,13áâà2,13áâà3,13áâà4
7700000000015450016
13áâà5,13
7700000000015450017
2ª1,2ª3,2ª7,2ª8,2ª9,2/23ª4,2/23ª5
7700000000015460001
2/23ª6,2/23ª6áâà2,2áâà1,2áâà2,2áâà3
7700000000015460002
2áâà4,2áâà5,2áâà6,2áâà8,2áâà9
7700000000015460003
7700000000015460004
2áâà14,2áâà15,2áâà17,4/14,6,6
7700000000015460005
7700000000015460006
1áâà4,1ª1,1ª2,1ª3,1ª4,1ª5,1ª5áâà3,1ª6
7700000000015460007
1ª7,1ª8,1ª9,1ª10,1ª11,1ª12,1ª13,1
7700000000015460008
1áâà2,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000015460009
3áâà6,3áâà7,3áâà8,3áâà9,3áâà12,3áâà13
7700000000015460010
3áâà14,3áâà15,3áâà16,3áâà19,3áâà23
7700000000015460011
3ª10,3ª11,3,3áâà1,3áâà4,3áâà6,5,5
7700000000015460012
7ª1,7ª2,7ª3,9ª1,9ª1áâà1,9ª2
7700000000015460013
5,5áâà1,5áâà3,7,7ª2,9,9áâà1,9áâà2,11
7700000000015490001
11áâà2,13,14ª1,14ª2,14ª3,14ª4,14ª4áâà2
7700000000015490002
15,15áâà1,16,18,18ª1,18ª2,18ª3,18,19,20
7700000000015490003
2,2,4,4áâà2,4áâà3,4,6,8,8ª2,8ª3
7700000000015490004
8ª3áâà2,10ª1,10ª1áâà1,10ª2,10ª3
7700000000015490005
22,24,26,28,28áâà1
7700000000015490006
1,1áâà3,3,5,7
7700000000015500001
1áâà1,29áâà1,29áâà2,29áâà6
7700000000015510001
2,2ª1,3áâà1,3áâà1,3áâà2,3áâà3,3áâà4
7700000000015520001
3áâà5,3áâà6,3áâà8,3áâà9,3áâà11,3áâà12
7700000000015520002
3áâà13,6,10áâà1,10áâà2,11áâà1,15
7700000000015520003
4,4,4áâà1,4áâà2,6,6ª2,8,10,12
7700000000015530001
12áâà1,12,12áâà1,12,12,14,14áâà2
7700000000015530002
14ª1,14,14áâà1,14,14áâà1,16,18,18
7700000000015530003
20,20
7700000000015530004
3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,7áâà1
7700000000015530005
7áâà2,7áâà3,15,17,19,19,19
7700000000015530006
2/6,2,3áâà1,3áâà2,3áâà3,4,4,5,5,6/5
7700000000015540001
7/7,8,8/6áâà2,9,10,10áâà2,10áâà3,10
7700000000015540002
11,11ª1,12,12áâà2,12áâà3,12áâà4,12áâà5
7700000000015540003
12áâà6,12áâà7,12áâà8,12áâà9,12áâà12,13
7700000000015540004
15,15,15áâà2,15áâà3,15áâà4,15áâà5
7700000000015540005
15áâà8,15áâà9,15áâà10,15áâà11
7700000000015540006
15áâà12,15áâà14,15áâà15,15áâà16
7700000000015540007
7700000000015540008
32,32,34,34áâà1,34áâà2,36,36áâà1
7700000000015550001
119285
36áâà2,38,38áâà1,38áâà2,40,40áâà1,55
7700000000015550002
55áâà1,57,57áâà1,59,59áâà1,61,61áâà1
7700000000015550003
63,63áâà1,67,67áâà1,67áâà2,69,69áâà1
7700000000015550004
71,71áâà1
7700000000015550005
19,19áâà1,19ª1,23áâà1,23áâà2,23áâà3
7700000000015550006
23áâà4,23áâà5,23áâà6,23áâà7,26,28
7700000000015550007
28áâà2,28áâà3,28áâà10,28áâà13,28áâà17
7700000000015550008
28áâà19,28áâà20,28áâà21,28áâà22
7700000000015550009
28áâà23,28áâà24,28áâà25,28áâà26
7700000000015550010
28áâà39,28áâà40,28áâà41,28áâà42
7700000000015550011
28áâà43,28áâà44,28áâà45,28áâà46,28,29
7700000000015550012
7700000000015550013
20,20
7700000000015550014
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà11
7700000000015550015
2áâà14,2áâà19,2áâà20,2ª13,2ª19,2ª20
7700000000015550016
4,4áâà5,4áâà7,4áâà11,4áâà13,4áâà19
7700000000015550017
4áâà20,4áâà21,4ª1,4ª2,4ª3,4ª4,4ª5,5
7700000000015550018
5áâà1,5áâà1,6,7,7áâà2,8,8áâà2,9,9áâà2
7700000000015550019
10,10áâà2,10áâà5,11,12,12,13,15
7700000000015550020
17áâà1,17áâà30,17ª1,17ª2,17ª3,17ª4
7700000000015550021
17ª5,17ª6,17ª7,17ª8,17ª11,17ª27,18
7700000000015550022
18áâà1,18áâà2
7700000000015550023
7700000000015560001
1/15,1/15áâà,1/15áâà,1/15ª,1/15ª
7700000000015560002
1/15ª,1/15ªáâà5,1/15ªáâà6,1/15áâà7
7700000000015560003
1/15áâà10,1/15ª,25áâà1,25áâà2,25ª2
7700000000015560004
3áâà1,4áâà1,5,5áâà1,5áâà2,5áâà3,8áâà1
7700000000015570001
2áâà1,3,5,5áâà2
7700000000015580001
6áâà1,13/15áâà1
7700000000015590001
3/31áâà1,3/31áâà7,3/31áâà10,3/31áâà13
7700000000015600001
1áâà1,8,11,12
7700000000015610001
1,3ª1,3ª2,3ª2áâà1,4,4áâà1,4áâà2,4áâà3
7700000000015630001
7700000000015630002
7700000000015630003
4áâà15,5ª1,5ª2,6ª1,6ª2,6ª2áâà1,7ª1,7ª2
7700000000015630004
8ª1,8ª1áâà1,9ª1,9ª2,10,10áâà1,12
7700000000015630005
3,3áâà2,4áâà1,4ª1,4ª2,4ª3,5,5áâà2
7700000000015640001
5áâà3,5áâà4,5áâà6,5áâà7,5áâà8,5áâà9
7700000000015640002
7áâà3,7áâà4,7ª1,7ª2,9,9áâà2,9áâà3
7700000000015640003
1/83,1,2,2áâà1,2áâà2,2ª1,3,5,5áâà1,6
7700000000015650001
6áâà1,6áâà2,6ª1,6ª1áâà1,7,8,8ª1,9
7700000000015650002
9áâà1,10,10áâà1,10áâà1,10áâà3,11,12
7700000000015650003
13,15,15áâà1,17,19,21,21,23,23áâà1,25
7700000000015650004
27,29,31,33,35,37,39,39áâà3,41,41áâà1
7700000000015650005
7700000000015650006
18,20,20áâà,20áâà1,20ª1,20ª1áâà1,20ª2
7700000000015650007
20ª3,20ª4,20ª4áâà1,47ª1,47ª1áâà1
7700000000015650008
47ª1áâà2,47ª2,47ª3
7700000000015650009
4ª1,4ª1áâà1,4ª2,4ª3
7700000000015660001
7700000000015660002
6,6,8,8áâà6,8áâà7,10,10áâà1,12,12
7700000000015660003
12áâà1,14,14áâà1,14áâà2,14ª1,16ª1
7700000000015660004
16ª2,16ª2áâà1,16,16áâà1,18,20,22,24/35
7700000000015660005
7,7áâà1,9,11,11,11
7700000000015660006
7700000000015670001
15áâà1,16áâà1,16áâà2,16áâà7,16áâà8
7700000000015700001
16áâà10
7700000000015700002
3áâà1,3áâà2,3áâà3,3áâà4,7áâà1,7áâà2
7700000000015710001
7áâà3,7áâà4,9áâà1,9áâà2,13,15áâà1,17
7700000000015710002
17áâà2,19áâà1,19áâà2,21,27,27áâà1
7700000000015710003
27áâà1,27áâà2,27áâà2,27áâà3,27áâà4
7700000000015710004
7700000000015710005
2áâà8,14áâà2,14áâà7,14áâà8,20áâà1,24
7700000000015710006
20áâà4,21,22,22áâà1,23,23ªáâà1
7700000000015740001
23áâà1,24,26áâà1,26áâà2,28,29,29áâà3
7700000000015740002
30áâà1,30áâà3,31,32_34,32_34áâà3
7700000000015740003
32_34áâà6,36áâà1,36áâà2,36áâà3,38
7700000000015740004
38áâà2,38áâà6,44áâà1,44áâà2,44áâà3
7700000000015740005
1áâà2,1áâà3,1áâà5,1áâà6,2áâà1,3,4
7700000000015740006
4áâà1,4áâà1,4áâà2,6/2áâà1,6/2áâà2,7
7700000000015740007
8,9,9áâà2,10,11,12,13,14,14áâà2
7700000000015740008
16/2áâà1,16/2áâà2,25áâà1,25áâà2,46áâà1
7700000000015740009
3,5,5ª1,5ª2,5ª3,5ª4
7700000000015750001
1áâà1
7700000000015750002
7700000000015750003
1,1,1áâà1,2áâà3,2áâà4,2áâà5,2ª1,2ª2
7700000000015770001
2ª3,2,2áâà1,2áâà2,3,3áâà1,4,4áâà3
7700000000015770002
5,5áâà3,6ª1,6ª2,6ª2áâà1,7,8áâà,8ª1
7700000000015770003
8ª2,8ª2áâà3,8ª3,9,10ª1,10ª2,10ª2áâà2
7700000000015770004
10ª2áâà3,11ª1,11ª2,11ª4,11ª5,11ª8,11ª9
7700000000015770005
11ª10,11ª11,11ª12,12,13,14,15,15áâà2
7700000000015770006
16,18,18áâà2,18áâà3,20,22,24,26áâà2
7700000000015770007
26áâà7,26ª1,26ª2
7700000000015770008
21,23,23,25,27,27áâà4,28,29,30,30áâà2
7700000000015770009
30,30,30áâà2,30áâà3,32,34,36
7700000000015770010
36áâà2,38
7700000000015770011
44áâà1,44áâà2,44áâà3,44áâà4,50áâà1
7700000000015780001
58áâà4,62,62áâà1,62áâà2,62áâà3,62áâà4
7700000000015780002
62áâà5,62áâà6,62áâà7,72áâà2,72áâà3
7700000000015780003
72áâà4,72áâà10,72áâà11,72áâà17,72áâà18
7700000000015780004
72áâà19,75ª1,75ª1áâà1,75ª2,77,77áâà1
7700000000015780005
77,79,79áâà1,79áâà2
7700000000015780007
89áâà1,89áâà2,89áâà3,89áâà4,89áâà5
7700000000015780008
89áâà6,89áâà7,89áâà8,89áâà11,89áâà12
7700000000015780009
89áâà13,90áâà1,90áâà1,90áâà1,90áâà2
7700000000015780010
7700000000015780011
7700000000015780012
7700000000015780013
7700000000015780014
1áâà8,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000015780015
2áâà6,2áâà7,2áâà9,2áâà10,2áâà11,2áâà12
7700000000015780016
7700000000015780017
7700000000015780018
7700000000015780019
2áâà28,2áâà30,2áâà30,2áâà31,2áâà34
7700000000015780020
2áâà35,2áâà36,2áâà37,2áâà38,2áâà39
7700000000015780021
2áâà40,2áâà41,2áâà42,2áâà43,2áâà44
7700000000015780022
2áâà45,2áâà46,2áâà47,2áâà48,2áâà49
7700000000015780023
2áâà51,2áâà52,2áâà53,2áâà58,2áâà59
7700000000015780024
2áâà60,2áâà61,2áâà62,2áâà63,2áâà64
7700000000015780025
2áâà65,2áâà66,2áâà68,2áâà70,2áâà71
7700000000015780026
2áâà72,2áâà73,2áâà74,2áâà75,2áâà77
7700000000015780027
2áâà78,2áâà79,2áâà80,2áâà81,2áâà82
7700000000015780028
2áâà83,2áâà84,2áâà86,2áâà87,2áâà88
7700000000015780029
2áâà89,2áâà90,2áâà91,2áâà92,2áâà93,2
7700000000015780030
5áâà2,6,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000015780031
6áâà6,6áâà7,6áâà8,6áâà10,6áâà11,6áâà12
7700000000015780032
9,9áâà1,9áâà2,10,10áâà1,11,11áâà1,12
7700000000015780033
13,13,13áâà1,13áâà5,14,17,17áâà3
7700000000015780034
17áâà4,17ª1,18áâà1,19áâà2,19ª1,19ª2
7700000000015780035
19ª3,21,21áâà1,21áâà3,21,22,22áâà2,23
7700000000015780036
23,25,25áâà2,25áâà3,25,27,27áâà1,28
7700000000015780037
29,29ª2,31ª1,31ª1áâà2,31ª1áâà3,31ª2,38
7700000000015780038
7700000000015780039
38áâà12,38áâà15,38áâà16,38áâà17
7700000000015780041
38áâà18,38áâà20,38áâà21,38áâà25
7700000000015780042
38áâà27,38áâà28,38áâà29,38áâà31
7700000000015780043
38áâà32,38áâà33,42,42áâà1,42áâà2
7700000000015780044
7700000000015780045
42áâà8,42áâà9,42áâà10,42áâà11,42áâà12
7700000000015780046
42áâà13,42áâà14,42áâà15,42áâà16
7700000000015780047
42áâà17,42áâà19,42áâà20,42áâà24
7700000000015780048
42áâà25,42áâà29,42áâà30,42áâà31
7700000000015780049
42áâà32,44,44áâà2,44áâà3
7700000000015780050
21áâà1
7700000000015780006
1áâà1,1áâà2,1áâà3,2,3,3áâà2,4,6,8áâà1
7700000000015790001
1áâà7,4ªáâà1,4ªáâà2,4áâà3,4,6,7áâà1
7700000000015800001
7áâà3,8,9,9,11_,12áâà1,12áâà2,12áâà3
7700000000015800002
12áâà1,13áâà1,13áâà9,18/1ª3,25áâà1
7700000000015800003
28áâà1,28áâà2,28áâà3,28áâà7
7700000000015800004
28áâà8,29/31áâà1,33áâà1,33áâà3,33áâà4
7700000000015800005
33áâà5,33áâà6
7700000000015800006
18ª2,20,20
7700000000015800007
2,4,4áâà1,4,6áâà1,6,6,6,8áâà1
7700000000015810001
8áâà4,8,10,10,12áâà1,12áâà6
7700000000015810002
2áâà1,2áâà2,20áâà1,20áâà2,20áâà4
7700000000015820001
20áâà5,20áâà8,20áâà9,20áâà2
7700000000015820002
1,1áâà2,1áâà1,3áâà1,3,3áâà2,5ª1,5ª2
7700000000015830001
7,7,9,11/1,15áâà1,15áâà2,15áâà3
7700000000015830002
17áâà1,17áâà2
7700000000015830003
1,1áâà2,1ª1,1ª1áâà3,1ª2,1ª3,1ª3áâà2
7700000000015840001
1ª3áâà3,1,2,2,2,3,3,3,3,3,4ª1
7700000000015840002
4ª1áâà2,4ª2,4ª3,4ª3áâà2,4ª5,4,5ª1
7700000000015840003
5ª1áâà2,5ª2,5ª2áâà3,6,6áâà2,8ª1
7700000000015840004
8ª1áâà2,8ª2,8ª3,8,10,10,10,12
7700000000015840005
7ª1,7ª2,9,9,11,11ª1,11ª1áâà5,11ª2
7700000000015840007
11ª2áâà2,11ª2áâà3,11ª3,11ª4,11ª5,13ª2
7700000000015840008
13ª2áâà3,13ª3,13ª4,13ª5,13ª5áâà2,13
7700000000015840009
13ª1,13ª2,13ª2áâà2,13ª2áâà10,13ª3
7700000000015840010
13ª4,13ª4áâà2,13ª4áâà3,13ª5,13ª6
7700000000015840011
13ª7,13,13,13,14,14,15ª1,15ª1áâà2
7700000000015840012
15ª1áâà3,15ª2,15ª3,15ª4,15ª5,15ª5
7700000000015840013
15áâà1,15áâà2,15,16,16áâà2,16áâà3
7700000000015840014
16áâà6,16,16,17áâà1,17áâà2,17ª1,17ª2
7700000000015840015
17ª3,17,17,18ª1,18ª1áâà2,18ª1áâà3
7700000000015840016
18ª2,19ª1,19ª2,19ª3,19ª3áâà2,19ª3áâà3
7700000000015840017
19ª4,20ª1,20ª1áâà2,20ª2,22,22áâà1
7700000000015840018
22áâà2,22áâà3,22áâà4,22áâà5
7700000000015840019
26ª1,26ª1áâà1,26ª2,26ª3,26ª4,28,28áâà1
7700000000015840020
28áâà2,28áâà3,28áâà6,28ª1
7700000000015840021
3,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000015850001
4áâà6,4áâà7,4áâà8,4áâà9,4ª1
7700000000015850003
4ª1áâà3,4ª2,4ª3áâà1,4ª3áâà2,4ª4
7700000000015850004
4ª4áâà1,5
7700000000015850005
7700000000015850002
2/4áâà1,2/4áâà3,3
7700000000015880001
1,2,2áâà1,2áâà2,2ª1áâà1,2ª1áâà2
7700000000015890001
2ª1áâà3,2ª1áâà4,2ª1áâà5,2ª1áâà6
7700000000015890002
2ª1áâà7,2ª1áâà8,2ª1áâà9,2,2,2,3
7700000000015890003
3áâà1,3áâà2,3áâà24,5áâà1,5áâà2,5áâà3
7700000000015890004
5áâà4,5áâà5,7áâà1,7áâà2,7áâà3,7áâà4
7700000000015890005
7áâà7,7áâà8,7áâà9,7áâà10,7áâà12,7áâà14
7700000000015890006
8,10áâà1,10áâà2,10áâà3,10áâà4
7700000000015890007
10áâà5,10áâà6,14áâà1,14áâà2,14ª1áâà1
7700000000015890008
14ª2,16áâà1,16áâà2,16áâà3,16ª2,16ª5
7700000000015890009
18áâà1,18áâà2,18áâà3,18áâà6,20áâà1
7700000000015890010
7700000000015890011
20áâà7,20áâà8,24áâà1,24áâà2,24áâà3
7700000000015890012
7700000000015900001
3áâà1,3áâà2,7,9,11áâà1,11áâà2,11ª1,13
7700000000015910001
15,17,19,19,19áâà1,19áâà2,19áâà3
7700000000015910002
19áâà4,19áâà5,19áâà6,19áâà7
7700000000015910003
7700000000015910004
19áâà12,19áâà13,19áâà14,19,21,21
7700000000015910005
23,23áâà1,23,23,25,25,25,25,25
7700000000015910006
27,27áâà1,28,29,32áâà1,32áâà2,33,34
7700000000015910007
34áâà1,36,38
7700000000015910008
2,2áâà1,2áâà2,2áâà3
7700000000015920001
103274
2/1,2/1áâà2,3,6,6áâà8,8áâà1,10áâà1
7700000000015920002
7700000000015920003
7700000000015920004
10áâà12,14,14áâà1,14áâà2,14,16áâà1
7700000000015920005
12,12áâà2,12,12áâà2
7700000000015920006
123610
18,18áâà1,20áâà1
7700000000015920008
6,14,14áâà1,19,21,21áâà2,23
7700000000015970001
1,2,2áâà1,2áâà2,2,2,2áâà2,3,4,4áâà2
7700000000015970002
4ª2,4ª2áâà1,5,7,7áâà2,9,11,13,13áâà2
7700000000015970003
5áâà1,5áâà2
7700000000015980001
áâà1,1áâà3,1/15,1/15áâà2,3,5_9,11áâà1
7700000000015990001
11áâà2,13áâà1,13áâà2,13áâà3
7700000000015990002
1,1áâà1,1áâà3,1ª1,1,3,3áâà1,3áâà2
7700000000016000001
3áâà3,3áâà4,3ª1,3ª2,3ª2áâà1,3ª2áâà3
7700000000016000002
3ª3,5/36,9,9áâà1,9,11,11,13,13áâà1
7700000000016000003
13áâà2,15,16áâà1,16áâà2,16áâà3,16áâà4
7700000000016000004
7700000000016000005
16áâà10,16áâà11,16áâà12,16áâà13
7700000000016000006
16áâà14,17,17
7700000000016000007
19,21,23,25,27,29,31,33,33,35,37
7700000000016010001
37áâà2,37áâà3,41,43
7700000000016010002
4,10,45,47,49,51,53,55,57,57,59,59,61
7700000000016010003
3,3áâà2,3ª2,3ª2áâà1,3ª2áâà2,3ª3,3ª4
7700000000016020001
3ª4áâà1,5ª1,5ª2,5ª3,5ª3áâà1,5ª4,7ª1
7700000000016020002
7ª1áâà2,7ª2,7ª2áâà3,7ª3,7ª3áâà1
7700000000016020003
7ª3áâà2,7ª3áâà3,7ª3áâà4,9,9áâà2,11
7700000000016020004
11áâà2,11áâà3,11áâà4,11áâà5,11áâà6
7700000000016020005
11áâà7,11áâà8,15,17,19,19áâà2,19áâà3
7700000000016020006
19áâà4,19áâà5,19áâà6,19ª2,35
7700000000016020007
4ª1,4ª2,4ª3,4ª4,6ª1,6ª2,6ª3,8,14
7700000000016020008
14áâà1,14áâà2,22,22ª2,32ª1,32ª2,32_
7700000000016020009
32_,32,34ª1,34ª2,34ª2áâà1,36,38ª1
7700000000016020010
38ª2,40ª1,40ª2,42ª1,42ª2,44ª1,44ª2
7700000000016020011
44ª2áâà1,44ª3,44ª4,44ª5,44ª5áâà1
7700000000016020012
44ª5áâà3,46
7700000000016020013
1áâà2,1/9áâà8,1/9áâà9,1/9áâà10,1/9áâà16
7700000000016030001
7700000000016040001
2,2áâà1,4,6_8áâà1,6_8áâà3,10,10áâà1
7700000000016050001
10áâà2,10áâà3,10áâà4,12,16
7700000000016050002
4,8,12,17áâà1,17áâà2,17áâà3,17áâà4
7700000000016060001
17áâà5,17áâà6
7700000000016060002
2áâà1,10áâà1,10áâà2,10áâà3,10áâà4
7700000000016070001
10áâà5,10áâà7,10áâà8,10áâà9,10áâà10
7700000000016070002
10áâà11,10áâà12,10áâà13,10áâà15
7700000000016070003
10áâà17,10áâà19,10áâà20,10áâà23
7700000000016070004
10áâà27,10áâà28,10áâà29,10/2áâà1,11áâà1
7700000000016070005
14_16,16áâà1
7700000000016090001
13ª1,13ª2,13ª2áâà1,13ª3áâà1,14ª1,14ª2
7700000000016100001
14ª3,15ª1,15ª1áâà1,15ª2,15ª3,15ª4,15ª5
7700000000016100002
15ª6,15ª7,16ª1,16ª2,16ª3,17ª1,17ª2
7700000000016100003
17ª3,17ª3áâà1,18ª1,18ª1áâà1,18ª2,18ª3
7700000000016100004
18ª4,19/28,20/30ª1,20/30ª2,20/30ª3
7700000000016100005
20/30ª3áâà1,20/30ª4,20/30ª5,20/30ª6
7700000000016100006
20/30ª7,20/30ª8,21/33ª1,21,22áâà1
7700000000016100007
22áâà2,23ª1,23ª2,23ª3,23ª4,23ª5
7700000000016100008
23ª5áâà1,23ª6,23ª6áâà1,23,24/35ª1
7700000000016100009
24/35ª2,24/35ª3,24/35ª4,24/35ª5
7700000000016100010
24/35ª6,24/35ª6áâà1,25,26,26áâà1,28
7700000000016100011
28ª2,30,32,34,34áâà1,36
7700000000016100012
27,27áâà1,29áâà1,29ª1,29ª2,29ª3,29ª4
7700000000016100013
29ª5,29ª6,29ª7,29ª8,31áâà1,31áâà2
7700000000016100014
1/19,2/21,3,3áâà1,3áâà2,4ª1,4ª2,4,5ª1
7700000000016100015
5ª2,5ª3,6,6áâà1,6áâà2,7ª1,7ª2,7ª3,8ª1
7700000000016100016
8ª2
7700000000016100017
3,3áâà2,8áâà1,8áâà2,10,11,12,13áâà1
7700000000016110001
13áâà2,14áâà1,15áâà1,15áâà2,16/22,19
7700000000016110002
19áâà2
7700000000016110003
3,3,4áâà1,4áâà2,4áâà3,4áâà5,4áâà10
7700000000016120001
5áâà2,5áâà4,9áâà1,9áâà2,9áâà3,9áâà4
7700000000016120002
7700000000016120003
10áâà6,10áâà9,11/13áâà1,11/13áâà4
7700000000016120004
7700000000016120005
12áâà6,12áâà8,12áâà10,12áâà11,12áâà13
7700000000016120006
12áâà14,12áâà17,12áâà19,14áâà1,14áâà2
7700000000016120007
1,3,4,4áâà2,4áâà3,5,5ª2,5ª2áâà2
7700000000016130001
6áâà1,6áâà2,6áâà3,6áâà4,6áâà1,6áâà3
7700000000016130002
7,9,9,11,11áâà2,11áâà3,13,13áâà2
7700000000016130003
13áâà3,13ª2,13ª2áâà3,15,17,17,19,19
7700000000016130004
19áâà2,21ª1,21ª2,21ª3,23ª1,23ª2
7700000000016130005
23ª2áâà3,23ª3,25,25,27,29ª1,29ª1áâà2
7700000000016130006
29ª1áâà3,29ª2,29ª3,29ª4,31,31,31áâà2
7700000000016130007
31áâà3,31áâà4,31áâà5,31áâà6,33
7700000000016130008
3áâà1,3áâà2,3áâà3,3áâà9,3áâà10,3áâà11
7700000000016150001
3áâà12,3áâà13,3áâà13,3áâà14,3áâà15,5
7700000000016150002
5áâà1,7,7áâà2,7áâà3,7áâà4,7áâà6,7áâà7
7700000000016150003
7áâà8,7,7áâà1,7áâà2,7áâà14,7
7700000000016150004
7áâà2,7áâà3,7áâà4,7áâà5,7áâà6
7700000000016150005
7áâà7,7áâà8,7áâà9,7áâà10,7áâà11
7700000000016150006
7áâà12,7áâà13,7áâà14,9,9áâà2,9áâà3
7700000000016150007
9áâà4,9áâà5,9áâà8,9áâà10,9áâà15,9áâà18
7700000000016150008
9áâà19,9áâà21,11,11áâà4,11áâà5,11áâà9
7700000000016150009
11áâà10,11áâà11,11áâà12,11áâà13
7700000000016150010
7700000000016150011
11áâà18,11áâà20,11ª1,11ª2,11áâà1
7700000000016150012
7700000000016150013
7700000000016150014
7700000000016150015
16áâà14,16,16áâà1,18,18áâà2,18áâà3
7700000000016150016
18áâà4,18áâà5,18áâà6,18áâà8,18áâà9
7700000000016150017
18áâà12,18áâà14,18,18áâà1,18áâà2
7700000000016150018
18áâà3
7700000000016150019
49,49,49,51,53,53áâà2,55,55áâà2,57
7700000000016150020
57/21áâà2
7700000000016150021
32,32,34ª1,34ª2,34,36
7700000000016150022
13/2ª1,13/2ª2,15áâà2,15áâà3,15ª1,15ª2
7700000000016150023
17áâà2,17ª1,17ª2,17ª3,19áâà1,19áâà2
7700000000016150024
19áâà3,19ª1,19ª2,19ª3,19,20,20áâà2
7700000000016150025
20áâà3,20áâà3,20áâà5,20áâà6,20áâà7
7700000000016150026
20ª1,20ª2,20ª3,20ª3,20ª4,20ª5
7700000000016150027
20ª6,20ª7,20ª7,20ª8,20,20áâà5
7700000000016150028
20áâà1,20áâà2,20áâà3,20áâà4,21
7700000000016150029
23ª1,23ª2,25,27,27áâà2,29,29áâà3,31,33
7700000000016150030
24ª1,24ª1áâà1,24ª2,24ª3,26,26áâà3,28
7700000000016150032
30ª3áâà2,30ª4,30,35áâà1,35áâà2,35áâà3
7700000000016150033
35áâà4,35,35áâà1,35áâà2,35áâà3
7700000000016150034
35áâà8,35áâà9,35áâà10,35áâà11,35
7700000000016150035
35áâà1,35,37ª1,37ª2,37ª2áâà2,37ª3
7700000000016150036
37ª4,37,37áâà2,37,37áâà1,39ª1,39ª2
7700000000016150037
41,43ª1,43ª2,43ª3,43,43áâà4,43áâà5
7700000000016150038
43áâà6,43,45áâà,45áâà2,45ª1,45ª2
7700000000016150039
45ª3,47,47áâà2,47áâà3
7700000000016150040
4ª1,4ª2,4ª2áâà1,4ª3,6ª2,8ª1,8ª2
7700000000016200001
8ª2áâà1,8ª3,10,12,12,12,14,14áâà1
7700000000016200002
3,3áâà1,5,7,9,9áâà1,9,9áâà2,11,11
7700000000016200003
13,15,17,17áâà1,19/17
7700000000016200004
5,7,9,9áâà2,11,13,15,17,19,19,21
7700000000016220001
21áâà2,23,23áâà2,23áâà3,25
7700000000016220002
4áâà2,4áâà3,8,9áâà1,9áâà2,11,13,17áâà1
7700000000016230001
7700000000016230002
17áâà7,17áâà8,17áâà9,17áâà10,17áâà11
7700000000016230003
17áâà12
7700000000016230004
3áâà1,4/2áâà1,5áâà1,5áâà2,5áâà4
7700000000016240001
12,14,18áâà1,18áâà2,18áâà3,18áâà4
7700000000016250001
2,2áâà1,16,17áâà1,18
7700000000016260001
11,11áâà1,13,13áâà2,15,15áâà1,15áâà2
7700000000016260002
3,3áâà1,3áâà3,3ª2,3,8/22,14,14áâà2,16
7700000000016270001
18áâà1,18áâà2,18áâà3,18áâà4,18áâà6
7700000000016270002
18áâà9,24,24áâà3,26áâà1,26áâà2
7700000000016270003
1,1áâà1,1áâà2,1áâà3,1áâà4,2,2áâà2
7700000000016280001
2áâà3,2áâà4,2áâà5,2áâà7,2áâà8,2áâà10
7700000000016280002
7700000000016280003
2áâà19,2áâà20,2áâà21,2áâà22,2ª2,2ª4,5
7700000000016280004
8,8ª1,8ª1áâà1,10,10áâà2,10áâà3,10áâà4
7700000000016280005
10áâà17,12,12áâà1,12áâà2,12ª3,12ª4
7700000000016280006
12ª4áâà1,12ª5,12ª6
7700000000016280007
7700000000016280008
7700000000016280009
121609
16áâà7,16áâà8,35,35áâà1,35áâà2,35áâà3
7700000000016280010
35áâà4,37,45áâà5,45áâà6,45ª1,45ª2,45ª3
7700000000016280011
45ª4
7700000000016280012
14,14áâà2,15,15áâà1,15áâà2,17áâà5
7700000000016280013
121614
17áâà6,17áâà7,17áâà8,17ª1,17ª2,17ª3
7700000000016280014
17ª4,21,21áâà2,23ª2,25,25áâà3,28
7700000000016280015
29áâà4,29ª1,29ª1áâà2,29ª2,29ª3,30
7700000000016280016
30áâà2,30áâà3,30áâà5,30áâà6,30ª1
7700000000016280017
31áâà3,31ª1,31ª2,31ª2áâà2,33ª1,33ª2
7700000000016280018
33ª2áâà1,33ª2,33ª3
7700000000016280019
40áâà46
7700000000016280020
40,40áâà4,40áâà5,40áâà6,40áâà7,40áâà8
7700000000016280021
40áâà9,40áâà10,40áâà11,40áâà12,40áâà13
7700000000016280022
40áâà14,40áâà15,40áâà16,40áâà17
7700000000016280023
40áâà19,40áâà20,40áâà23,40áâà24
7700000000016280024
40áâà25,40áâà26,40áâà28,40áâà29
7700000000016280025
40áâà30,40áâà31,40áâà33,40áâà34
7700000000016280026
40áâà36,40áâà37,40áâà38,40áâà39
7700000000016280027
40áâà40,40áâà43,40áâà44,40áâà45
7700000000016280028
40áâà48,40áâà51,40áâà52,40áâà52
7700000000016280029
40áâà52,40áâà53,40áâà53,40áâà54
7700000000016280030
40áâà54,40áâà55,40áâà56,40áâà57
7700000000016280031
40áâà58,40áâà59,40áâà60,40áâà61
7700000000016280032
40áâà62,40áâà66,40áâà67,40áâà69
7700000000016280033
40áâà70,40áâà71,40áâà72,40áâà73
7700000000016280034
42áâà1,42áâà2,42áâà3,42áâà4,42áâà5
7700000000016280035
42áâà6,42áâà7,42áâà8,42áâà9,42áâà10
7700000000016280036
42áâà11,42áâà12,42áâà14,46áâà1
7700000000016280037
1,1áâà2,3,3ª2,5,5áâà2,5áâà3,5ª1,7ª2,9
7700000000016290001
11,13,13áâà2,15ª1,15ª2,15ª2áâà1
7700000000016290002
15ª2áâà2,15ª2áâà3,17,19,21,23,23ª1
7700000000016290003
25ª1,25ª2
7700000000016290004
12,14,24ª2,24ª2áâà1,24ª2áâà2,24ª4,26ª1
7700000000016290005
26ª2,26ª3,26ª4áâà2,27ª1,27ª1áâà1,27ª2
7700000000016290006
27ª2áâà4,27ª2,27ª3,28,28ª1,28ª1áâà3
7700000000016290007
28ª2,28ª3,28ª4,28ª5,29,30áâà6,30ª2
7700000000016290008
30ª2áâà2,30ª2áâà3,30ª2,30ª3,30ª4
7700000000016290009
30ª4áâà5,30ª5,30ª5áâà2,30ª6,30ª7,30ª8
7700000000016290010
30ª9,31,32ª1,32ª2,32ª2áâà2,32ª3,33áâà4
7700000000016290011
33ª1,33ª1áâà1,33ª2,33ª3,33ª3áâà2,34,35
7700000000016290012
35áâà5,35ª1,35ª1,35ª2,35ª3,35ª4
7700000000016290013
36áâà4,36ª1,36ª2,36ª2áâà5,36ª3,37
7700000000016290014
37áâà2,38ª3,38ª3,39ª1,39ª1áâà1,39ª2
7700000000016290015
39ª2,41ª1,41ª2,43,45ª1,45ª2,47,47áâà2
7700000000016290016
47áâà9,49,51,51áâà2,53
7700000000016290017
16áâà1,16áâà2,16áâà3
7700000000016310001
7700000000016320001
3áâà1,3áâà2,3áâà3,3ª1,4,5áâà1,5áâà1
7700000000016330001
6,6áâà2,8,8ª2,9áâà,9áâà1,9áâà2,9áâà3
7700000000016330002
7700000000016330003
9áâà11,9áâà12,9áâà13,9áâà14,9áâà16
7700000000016330004
7700000000016330005
9áâà22,9áâà23,9áâà24,9áâà25,9áâà26
7700000000016330006
9áâà28,9áâà29,9áâà30,9áâà31,9áâà32
7700000000016330007
9áâà33,9áâà33,9áâà33,9áâà33,9áâà33
7700000000016330008
9áâà33,9áâà33,9áâà33,9áâà33
7700000000016330009
9áâà33,9áâà33,9áâà34,9áâà35,9áâà36
7700000000016330010
9áâà37,9áâà38,9áâà39,9áâà42,9áâà43
7700000000016330011
9áâà44,9áâà45,9áâà46,9áâà47,9áâà48
7700000000016330012
9áâà49,9áâà50,9áâà51,9áâà53,9áâà55
7700000000016330013
9áâà56,9áâà57,9áâà58,9áâà59,9áâà60
7700000000016330014
9áâà61,9áâà62,9áâà63,9áâà64,9áâà65
7700000000016330015
9áâà66,9áâà67,9áâà68,9áâà69,9áâà70
7700000000016330016
9áâà71,9áâà72,9áâà73,9áâà74,9áâà75
7700000000016330017
9áâà2,10,10áâà1
7700000000016330018
6,8,9,9áâà1,12
7700000000016350001
7700000000016360001
4,6,8,8áâà2,10,12ª1,12ª2,12ª2,12ª3
7700000000016370001
12ª4,14,16áâà4,16ª1,16ª2,16ª3,18ª1
7700000000016370002
18ª2,18ª3,18ª3áâà6,18ª4,18ª5,20ª1,22ª1
7700000000016370003
22ª2
7700000000016370004
3áâà5,3ª1,3ª2,5ª1,5ª2,7,13,15ª1,15ª2
7700000000016370005
15ª3,17,17áâà2,17
7700000000016370006
46/54áâà1,46/54áâà2
7700000000016380001
121069
7700000000016380002
3áâà2
7700000000016390001
7700000000016400001
3,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000016410001
6áâà1,6áâà2,6áâà3,8,10áâà1,10áâà2
7700000000016410002
10áâà3,10áâà12,14áâà1,16
7700000000016410003
7,7ª1,9áâà1,9áâà2,9áâà1,9áâà2,9áâà3
7700000000016430001
9áâà11,9áâà16,17áâà1
7700000000016430002
1ª1,1ª1áâà1,1ª2,1ª2áâà1,2áâà4,2ª1
7700000000016440001
2ª1áâà3,2ª2,3ª1,3ª2,4áâà4,4ª1,5ª1,5ª2
7700000000016440002
5ª2áâà3,6,7,8,8áâà1,8áâà2
7700000000016440003
9,9áâà2,9ª1,10,10ª1,11ª1,11ª2,12ª1
7700000000016440004
12ª1áâà2,12ª1áâà4,12ª2,13,14,14ª2
7700000000016440005
15áâà2,15áâà3,15ª1,15ª2,16áâà2,16ª1
7700000000016440006
16ª1áâà1,16ª2áâà1,16ª2áâà2,16ª2áâà3
7700000000016440007
16ª2áâà4,16ª2áâà5,16ª2áâà6,16ª2áâà8
7700000000016440008
17ª2,17ª2áâà1,18áâà2,18ª1,19,19áâà3
7700000000016440009
19áâà4,20áâà1,20áâà1,20áâà1,20áâà1
7700000000016440010
20áâà1,20áâà1,20áâà3,20áâà4,20áâà5
7700000000016440011
20áâà6,20áâà7,20áâà8,20áâà14,21,21áâà1
7700000000016440012
22,22ª3,23,23áâà1,23áâà2,24ª1,24ª2
7700000000016440013
24ª2áâà1,24ª2áâà4,24ª3,24ª3áâà1,25ª1
7700000000016440014
25ª1áâà1,25ª2,25ª3,26,26áâà1,27
7700000000016440015
2áâà1,4,7,9,9ª1,9ª1áâà1,9ª2,20,20áâà1
7700000000016450001
1,3,3áâà1,3áâà2,3,3,5,10áâà1
7700000000016450002
áâà3,áâà3,1,1,1,1áâà1,1ª1,1ª2
7700000000016450003
1,1áâà1,1áâà2,1áâà3,1áâà4,2,3áâà1
7700000000016460001
3áâà2,3áâà3,3áâà4,4,4áâà2,5,6,6áâà3,8
7700000000016460002
8áâà3,8,10áâà2,10áâà3,10áâà4,10áâà5
7700000000016460003
10áâà6,12áâà1,12áâà2,14,14áâà2
7700000000016460004
1,1áâà2,1áâà6,2,2áâà3,2/7áâà2,4áâà4
7700000000016470001
4ª1,4ª1áâà2,4ª2,4ª2áâà2,4ª3,5,6,6áâà1
7700000000016470002
7ª1,7ª2,7ª3,8ª1,8ª1áâà2,8ª1áâà3,8ª2
7700000000016470003
9ª1,9ª2,10,10áâà2,10áâà3,11,13,13/6
7700000000016470004
13/6áâà4,13/6,15,15ª2,17,17áâà1,19ª3
7700000000016470005
1,2,4,4,6áâà1,6/1,6/1áâà2,8,8áâà2,10
7700000000016480001
1,2,2áâà2,2áâà3,2,3,3áâà2,3áâà3,5áâà3
7700000000016490001
5ª1,5ª2,6,6áâà1,6áâà2,6áâà3,7,12
7700000000016490002
7700000000016490003
1,1áâà1,1áâà2,1áâà3,1áâà1,1áâà2
7700000000016510001
1áâà3,1áâà4,1áâà5,1áâà6,2,2áâà1,3
7700000000016510002
3áâà1,3áâà2,3áâà1,3áâà2,3áâà3
7700000000016510003
3áâà4,3áâà5,3áâà1,3áâà2,4,5,6,8,9
7700000000016510004
13,13ª1,13ª1áâà1,13ª2áâà1,13ª3
7700000000016520001
13ª3áâà1,15áâà1,15áâà2,15áâà3,17
7700000000016520002
17áâà1,17ª1,17ª1áâà1,17ª2áâà1,17ª3
7700000000016520003
17ª4,17ª5,17ª6,17ª7,17ª8,17ª9,17ª11
7700000000016520004
17,17áâà1,17áâà2,17áâà3,17áâà4
7700000000016520005
7700000000016520006
7700000000016520007
17áâà13,17áâà14,21,21áâà1,21áâà2
7700000000016520008
21áâà3,21áâà6,21áâà7,21áâà10,21áâà11
7700000000016520009
27,27ª1,27ª2,27ª3,27ª4,27ª5,27ª6,27ª7
7700000000016520010
27ª8,27ª9,27ª10,27ª11,27ª12,27ª12áâà1
7700000000016520011
27ª14,27ª15,27ª16,27ª17,27ª18,27ª19
7700000000016520012
27ª20,27ª21,27ª22,27ª22áâà1,29,29ª2
7700000000016520013
29ª3,29ª4,29ª5,29ª6,29ª6áâà1,29ª7,29ª8
7700000000016520014
29ª9,29ª9áâà1,29ª10,29ª10áâà1,29ª11
7700000000016520015
29ª12,29ª13,29ª14,29ª15,29ª16,29ª17
7700000000016520016
29ª18,29ª19,29ª20,29ª21,29ª22,29ª23
7700000000016520017
29ª24,29ª25,29,30,30áâà1,30ª1,32,33
7700000000016520018
33áâà1,33áâà1,33áâà2,34,36,38,38áâà1
7700000000016520019
38ª1,38ª1áâà1,40,40áâà1,40ª1,40ª2,40ª3
7700000000016520020
40ª4,42,42ª1,42ª2,42ª3,44,48,48áâà1
7700000000016520021
48ª1,48ª2,50,50ª1áâà1,52,52áâà1,54,58
7700000000016520022
60,62,64,66,68,70,70áâà1,72,74,76,78
7700000000016520023
80,82,84,86,86,88,90,92,94,96,100
7700000000016520024
102áâà1,104,106,106ª1,108,110,118
7700000000016520025
2,17,17áâà2,23/13,25
7700000000016540001
1áâà101
7700000000016550001
1,2,2ª2,2ª2,2,2,3,4,4,5,6,6,7
7700000000016560001
8,8áâà2,9,11,11ª2,11ª2áâà2,11ª3,11ª4
7700000000016560002
11ª4áâà2,20
7700000000016560003
3,4,4ª1,4ª1,4ª2,4ª3,5,6,6áâà2,6áâà3
7700000000016580001
10,16,16áâà1,16áâà2,16áâà3,16áâà4
7700000000016580002
16áâà4,16áâà5,16áâà6,16áâà7,16áâà8
7700000000016580003
16áâà9,16áâà10,16áâà11,16áâà12,16áâà13
7700000000016580004
16áâà14,16áâà15,16áâà16,16áâà17
7700000000016580005
16áâà18,16áâà19,16áâà20,16áâà21
7700000000016580006
16áâà22,16áâà23,16áâà24,16áâà25
7700000000016580007
16áâà26,16áâà27,16áâà29,16áâà30
7700000000016580008
16áâà33,16áâà35,16áâà36,16áâà37
7700000000016580009
16áâà38,16áâà39,21áâà1,21áâà2,21áâà3
7700000000016580010
1,1áâà1,2ª1,2ª2,3,4ª1,4ª2,4ª3,4ª1
7700000000016600001
4ª1áâà2,4ª2,4ª3,4ª4,4ª5,4ª5áâà2
7700000000016600002
4ª5áâà3,5,6áâà4,6áâà14,6ª1,6ª2,6ª3
7700000000016600003
6ª4,6ª5,6ª6,6ª7,6ª8,6ª9,6ª10,6ª11,6ª12
7700000000016600004
6ª12áâà2,6ª13,6áâà1,6áâà2,6áâà3
7700000000016600005
6áâà4,6ª1,6,6áâà2,7áâà2,7ª1,7ª2
7700000000016600006
7ª3,9ª1,9ª2,9ª3
7700000000016600007
8,8áâà1,8áâà1,11ª1,11ª2,11ª3,13
7700000000016600008
13áâà2,15ª1,15ª2,15ª3,17ª1,17ª2,17ª3
7700000000016600009
19ª1,19ª2,19ª3,19,21,21áâà2,21,21
7700000000016600010
21áâà3,21áâà4
7700000000016600011
12,23ª2,25
7700000000016600012
8áâà1,8áâà2,12,14,14áâà1,14áâà2,14áâà4
7700000000016610001
14áâà6,14áâà9,14áâà10,14áâà12,14áâà14
7700000000016610002
14áâà15
7700000000016610003
1,1áâà1,3,4,6,6áâà2,6ª1,6ª2,8,10
7700000000016620001
10áâà2,12,12áâà1,14,16áâà3,16ª1,16ª2
7700000000016620002
18,18áâà2,20,22,24,26,26áâà2,26áâà3
7700000000016620003
28/42
7700000000016620004
7áâà1
7700000000016620005
19,19áâà2,19áâà3,19áâà4,19áâà5,19áâà6
7700000000016620006
19áâà7,21,21áâà2,21áâà3,23áâà1,23áâà2
7700000000016620007
23áâà3,23áâà4,23áâà5,23áâà10,23
7700000000016620008
23áâà1,40/49,42,42áâà2,44ª1,44ª2,44ª3
7700000000016620009
46ª1,46ª1áâà2,46ª1áâà3,46ª2,46,48ª1
7700000000016620010
48ª1áâà4,48ª2,48ª2áâà2,48ª3,50áâà6
7700000000016620011
50ª1,50ª2,50ª2áâà3,52,52áâà2,52,54ª1
7700000000016620012
54ª2,54ª2áâà7,56/23
7700000000016620013
32,34,34áâà1,34áâà2,34ª1
7700000000016620014
5,6áâà1,6áâà2,6áâà5,6áâà9,6áâà10
7700000000016630001
6áâà11,6áâà15,6áâà17,6áâà18,6áâà19
7700000000016630002
6áâà20,6áâà26,8,9
7700000000016630003
3/8áâà1,3/8áâà2,4áâà1,4áâà4,5áâà1,6,8
7700000000016660001
10áâà1,10áâà4,10áâà6,11ª1,11ª2,12
7700000000016660002
15áâà1,17áâà1,17áâà2,17áâà3,17áâà4
7700000000016660003
1/2,2/37,4/6áâà3,4/6áâà4,4/6áâà5
7700000000016670001
4/6áâà6,4_6áâà1,4_6áâà2,5,7,8,9,10,11
7700000000016670002
13,13áâà2,15
7700000000016670003
16áâà1
7700000000016670004
2,2áâà1,4,8
7700000000016680001
1,2,2,3,4,5,6,7,7áâà7,8,8áâà2,8áâà28
7700000000016690001
8,9,9áâà4,10áâà1,10áâà2,10áâà3
7700000000016690002
10áâà20,10áâà21,10,13,13
7700000000016690003
1,2,2_4áâà1,2_4áâà2,3áâà1,3áâà2,5,6
7700000000016700001
6áâà1,7,8,8,8,9,10,11,11,12,12áâà1
7700000000016700002
14,14áâà9,15,15áâà1,15áâà2,16,17áâà1
7700000000016700003
17áâà2,17,18,19,20_22,20_22áâà1
7700000000016700004
20_22áâà11,20_22áâà22,24
7700000000016700005
1,1áâà1,1ª1,2,3,3,4,5áâà1,5áâà2,5áâà3
7700000000016710001
5áâà9,6,6,7áâà1,7áâà2,8,9áâà3,9áâà6
7700000000016710002
10,10áâà2,10áâà3,10áâà4,11áâà1,12áâà1
7700000000016710003
12áâà2,12áâà3
7700000000016710004
1,3,4,4,5,5,6,7,8áâà1,8áâà14,9,11,15
7700000000016720001
17,17áâà1,19/9
7700000000016720002
7700000000016730001
7700000000016740001
129323
7700000000016740002
1áâà13,1áâà14,1áâà15,1áâà17,1áâà18
7700000000016740003
1áâà25,1áâà27,1áâà34,2,3áâà1,3áâà2
7700000000016740004
3áâà3,3áâà4,3áâà5,3áâà7,3áâà8,3áâà9
7700000000016740005
3áâà10,3áâà21,4,5áâà1,5áâà2,5áâà3
7700000000016740006
7700000000016740007
5áâà10,5áâà11,5áâà12,6,7,8,10,12,13
7700000000016740008
14,15áâà1,15áâà2,15áâà3,15áâà4,15áâà5
7700000000016740009
16,18,20,22,24,26
7700000000016740010
4áâà3,4áâà4,8/4áâà1,8/4áâà2,8/4áâà3
7700000000016760001
8/4áâà4
7700000000016760002
1áâà1,1áâà3,2_4,2_4áâà5,3,3áâà2,3áâà3
7700000000016770001
4áâà1,5_7,5_7áâà5,5_7áâà6,6_8,6_8áâà1
7700000000016770002
10,12,13_15áâà1,13_15áâà2,13_15áâà4,14
7700000000016770003
19,19áâà2,20,21,22áâà1,23áâà1,23áâà2
7700000000016770004
23áâà3,23áâà4,24
7700000000016770005
3,3áâà1,4,5,5áâà1,6/5,6,8/6,10,16
7700000000016780001
18,20,22,24/2
7700000000016780002
7,7áâà2,7áâà3,7áâà4,7áâà5,7áâà5,11
7700000000016790001
7700000000016790002
4,4ª1,4ª1áâà1,4,4áâà5,4áâà6,4áâà7
7700000000016790003
7700000000016790004
4áâà13,4áâà14,4áâà15,4áâà16
7700000000016790005
4áâà17,4áâà18,4áâà19,4áâà20
7700000000016790006
4áâà21,4áâà22,4áâà24,4áâà25
7700000000016790007
4áâà26,4áâà27,4áâà28,4áâà30
7700000000016790008
4áâà31,4áâà33,4áâà34,4áâà35
7700000000016790009
4áâà36,4áâà38,4áâà39,4áâà40
7700000000016790010
4áâà41,4áâà42,4áâà43,4áâà44
7700000000016790011
4áâà45,4áâà46,4áâà49,4áâà50
7700000000016790012
4áâà52,4áâà53,4áâà54,4áâà55
7700000000016790013
4áâà56,4áâà59,4áâà61,4áâà62
7700000000016790014
4áâà63,4áâà66,4áâà67,4áâà68
7700000000016790015
4áâà69,4áâà70,4ª1,4ª2,4ª3,4ª4,6
7700000000016790016
6áâà1,6áâà3,6áâà4,6áâà5,6áâà6,6áâà7
7700000000016790017
7700000000016790018
6áâà13,6áâà14,6áâà15,6áâà16,6áâà19
7700000000016790019
6áâà20,6áâà21,6áâà22,6,6áâà1,6áâà2
7700000000016790020
7700000000016790021
7700000000016790022
6áâà13,6áâà14,6áâà15,6áâà16
7700000000016790023
6áâà17,6áâà1,6áâà2,6áâà4,6áâà5
7700000000016790024
8áâà1,8áâà2,8áâà3,8áâà1,8áâà2,10áâà1
7700000000016790025
12,12ª1,12,14áâà1,28,32áâà1,32áâà2
7700000000016790026
32áâà3,32áâà4,32,38áâà5,38,40,40áâà1
7700000000016790027
40áâà2,40áâà3,40áâà4,40áâà5,40áâà6
7700000000016790028
40áâà7,40áâà8,40áâà9
7700000000016790029
3,5,5ª2,6_8,7áâà1,7áâà2,7áâà3,10,12
7700000000016810001
14/9áâà1,14/9áâà2
7700000000016810002
3áâà3,3áâà11
7700000000016820001
1,1áâà2,2,3áâà1,3áâà2,3áâà3,3áâà4
7700000000016850001
3áâà7,4,4áâà2,4áâà3,4/2,4/2áâà2,5áâà1
7700000000016850002
5áâà2,5áâà3,5áâà5,5áâà7,5áâà10,5áâà11
7700000000016850003
5áâà15,7áâà1,8,8áâà1,8áâà3,8áâà4,8áâà5
7700000000016850004
8áâà7,8áâà9,8áâà10,8áâà11,8áâà12
7700000000016850005
8áâà14,8áâà15,8áâà26,8áâà34,8áâà45
7700000000016850006
8áâà114,9,9áâà1,10,10áâà3,11,11áâà1
7700000000016850008
12,13áâà1,13áâà1,13áâà2,14áâà2,14áâà3
7700000000016850009
14áâà7,14áâà12,14áâà13,14ª1,14ª4,14ª5
7700000000016850010
15áâà1,15áâà2,15áâà3,15áâà4,15áâà6
7700000000016850011
15áâà9,15áâà10,15áâà11,15áâà12,15áâà14
7700000000016850012
15áâà15,15áâà16,15áâà17,15áâà18
7700000000016850013
15áâà19,15áâà20,15áâà21,15áâà22
7700000000016850014
15áâà28,15áâà29,15áâà30,15áâà31
7700000000016850015
15áâà33,15áâà35,15áâà36,15áâà38
7700000000016850016
15áâà40,15áâà42,15áâà43,15áâà44
7700000000016850017
15áâà46,15áâà54,15áâà60,16áâà1,16áâà2
7700000000016850018
16áâà3,16áâà26,17,18,19,19áâà2,20
7700000000016850019
20áâà2,21,21áâà1,21áâà2,21áâà3,23,24
7700000000016850020
24áâà,24áâà2,24áâà3,24,24áâà2
7700000000016850021
24áâà3,24áâà4,25,26áâà5,26áâà6,26ª1
7700000000016850022
26ª2,28,28áâà2,30áâà1,30áâà2,30áâà3
7700000000016850023
30áâà4,32/2
7700000000016850024
57,57áâà2,57áâà4,57áâà13,57,59
7700000000016850025
63,65,67ª1,69,69áâà1,69áâà2,69áâà3
7700000000016850026
71ª,71ª,71ª,71ª,71,71áâà1,73
7700000000016850027
73áâà2,73áâà3,73áâà4,73,73áâà2
7700000000016850028
73áâà3,73áâà5,75áâà2,75áâà2,75áâà3
7700000000016850029
75ª1,75ª1,75ª1,75,75áâà4,75áâà6
7700000000016850030
75,75áâà1,77ª1,77ª1áâà5,77ª2
7700000000016850031
36áâà70,36ª2,36ª56,40,40áâà4,40áâà5,44
7700000000016850032
77ª2áâà2,77ª3,77ª4
7700000000016850033
34,34áâà1
7700000000016850034
125124
36,36áâà1,36áâà2,36áâà2,36áâà3
7700000000016850035
36áâà3,36áâà4,36áâà5,36áâà6,36áâà7
7700000000016850036
36áâà8,36áâà9,36áâà10,36áâà11,36áâà15
7700000000016850037
36áâà16,36áâà17,36áâà18,36áâà19
7700000000016850038
36áâà20,36áâà21,36áâà22,36áâà23
7700000000016850039
36áâà24,36áâà29,36áâà32,36áâà35
7700000000016850040
36áâà46,36áâà47,36áâà48,36áâà49
7700000000016850041
36áâà50,36áâà51,36áâà52,36áâà53
7700000000016850042
36áâà55,36áâà59,36áâà60,36áâà61
7700000000016850043
44áâà3,44áâà4,46,48,48áâà9,48áâà10
7700000000016850044
48ª2,48ª3,50,52,54/1,54/1áâà2,54,54
7700000000016850045
56,58,58áâà2,58áâà4,60áâà4,60ª1,60ª2
7700000000016850046
60,62,62áâà1,62áâà2,62áâà5,62áâà21
7700000000016850047
62áâà22,62áâà24,62áâà26,62áâà27,62
7700000000016850048
62áâà1
7700000000016850049
37ª10,37ª11,37ª12,37áâà1,37áâà22
7700000000016850050
27,27áâà2,27áâà3,27áâà6,27áâà7,31áâà1
7700000000016850051
37ª3áâà8,37áâà4,37áâà32,37áâà46
7700000000016850052
37ª14áâà4,37ª14áâà6
7700000000016850007
37áâà1,37áâà12,37áâà13,37áâà14,37ª1
7700000000016850053
37ª2,37ª3,37ª5,37ª6,37ª7,37ª8,37ª9
7700000000016850054
37ª1,37ª2,37ª3,37ª14,37ª14áâà1
7700000000016850056
37ª14áâà2,37ª14áâà3,37ª14áâà5
7700000000016850057
37ª14áâà7,37,37áâà1,39áâà1,39áâà3
7700000000016850058
39áâà7,39áâà8,39áâà9,39áâà11,39áâà12
7700000000016850059
39áâà14,39áâà15,39áâà17,39áâà18
7700000000016850060
39áâà19,39áâà22,39áâà27,39áâà29
7700000000016850061
39áâà30,39áâà30,39áâà31,39áâà34
7700000000016850062
39áâà34,39áâà34,39áâà34,39áâà38
7700000000016850063
39áâà39,39áâà40,39áâà41,39áâà42
7700000000016850064
39áâà46,39áâà47,39áâà48,39áâà50
7700000000016850065
39áâà51,39áâà52,39áâà53,39áâà54
7700000000016850066
39áâà55,39áâà56,39áâà57,39áâà61
7700000000016850067
39áâà62,39áâà68,39áâà72,39áâà73
7700000000016850068
39áâà75,39áâà76,39áâà77,39áâà78,39
7700000000016850069
41áâà2,41áâà3,41áâà5,41áâà7,41áâà8
7700000000016850070
41áâà9,41áâà10,41áâà12,41áâà13,41áâà14
7700000000016850071
41áâà15,41áâà16,41áâà17,41áâà18
7700000000016850072
41áâà19,41áâà20,41áâà21,41áâà22
7700000000016850073
41áâà23,41áâà25,41áâà26,41áâà27,41ª1
7700000000016850074
41ª1,43áâà3,43ª1,43ª2,43,45ª1,45ª2
7700000000016850075
45ª2áâà3,45ª3,45ª4,45ª5,45áâà1,45ª1
7700000000016850076
45ª2,45ª3,45ª4,45ª5,45ª6,45ª9
7700000000016850077
45ª10,45ª10,45ª10,45ª10
7700000000016850078
45ª10,45ª11,45ª12,45ª14,45ª16
7700000000016850079
45ª17,45ª19,45ª20,45ª22,45ª24
7700000000016850080
45ª25,45ª26,45ª28,45ª30,45ª31
7700000000016850081
45ª32,45ª33,45ª35,45ª37,45ª38
7700000000016850082
45ª40,45ª42,45ª43,45ª44,45ª45
7700000000016850083
45ª46,45ª47,45ª48,45ª53,45ª54
7700000000016850084
45ª56,45ª60,45ª60,45ª61,45ª63
7700000000016850085
45ª64,45ª68,45ª69,45ª71,45ª72
7700000000016850086
45ª76,45ª76,45ª77,45ª78,45ª79
7700000000016850087
45ª80,45ª81,45ª81,45ª82,45ª83
7700000000016850088
45ª84,45ª85,45ª88,45ª89,45ª101
7700000000016850089
45ª102,47áâà,47áâà,47áâà1,47áâà2
7700000000016850090
7700000000016850091
47áâà12,47áâà13,47áâà19
7700000000016850092
80ª,80ª,80ª,80ª,80ª,80ª,80ª
7700000000016850093
125190
80ª,80áâà1,80ª1,80ª2,80ª3,80ª4,80ª4
7700000000016850094
80ª5,80ª5,80ª7,80ª8,80ª8,80ª8,80ª8
7700000000016850095
80ª9,80ª10,80ª11,80ª12,80ª12,80ª12
7700000000016850096
80ª15,80ª16,80ª17,80ª19,80ª20,80ª21
7700000000016850097
80ª22,80ª23,80ª24,80ª24,80ª24,80ª25
7700000000016850098
80ª26,80ª28,80ª29,80ª30,80ª30,80ª32
7700000000016850099
80ª32,80ª32,80ª32,80ª32,80ª32
7700000000016850100
80ª33,80ª34,80ª35,80ª37,80ª39,80ª40
7700000000016850101
80ª41,80ª42,80ª44,80ª45,80ª46,80ª47
7700000000016850102
80ª48,80ª49,80ª51,80ª51,80ª52,80ª53
7700000000016850103
80ª54,80ª56,80ª66,80ª68,80ª69,80ª70
7700000000016850104
80ª72,80ª78
7700000000016850105
31áâà3,31áâà4,31áâà9,31áâà30,31áâà31
7700000000016850106
31áâà32,31áâà41,31áâà1,33áâà1,33áâà12
7700000000016850107
33áâà16,33ª1,33ª3,33ª4,33ª5,33ª6,33ª7
7700000000016850108
33ª8,33ª9,33ª10,33,33áâà2,33áâà3,35
7700000000016850109
74ª1áâà8,74ª2,74ª3,74ª4,74ª5,74ª5áâà2
7700000000016850110
7700000000016850111
7700000000016850112
66,66ª1áâà3,66ª2áâà2,68,68áâà2,68áâà7
7700000000016850113
68áâà9,68áâà10,68áâà11,68áâà15,68áâà16
7700000000016850114
68áâà17,68áâà19,68áâà20,68áâà22
7700000000016850115
68áâà23,68áâà24,68áâà25,68áâà1,70
7700000000016850116
72áâà1,72áâà2,72áâà3,72áâà4,72áâà16
7700000000016850117
74ª5áâà4,74ª6,74,74áâà1,76áâà1,76ª1
7700000000016850118
76ª2,76ª3,76ª4,76ª4áâà1,76,78ª1,78ª2
7700000000016850119
78ª2áâà2,78ª2áâà4,78ª3,78ª4,78ª5
7700000000016850120
64,64áâà2,64áâà3,64áâà4,64áâà5,64áâà6
7700000000016850124
64áâà7,64áâà9,64áâà10,64áâà23,64áâà24
7700000000016850125
49/2,51ª1,51ª2,51ª3,53,55
7700000000016850126
125468
3áâà1,3ª1,3ª2
7700000000016860001
7,8áâà1,8áâà2,8áâà3,8ª1,8ª2,8ª3,9
7700000000016860002
9áâà4,9ª1,9ª1áâà3,9ª1áâà5,9ª2,9ª3,10
7700000000016860003
13áâà1,13ª1,13ª2,13,13áâà2,13áâà7
7700000000016860004
14áâà1,15,16áâà3,16áâà9,16áâà9
7700000000016860005
16áâà52,16áâà1,16áâà2,16áâà3
7700000000016860006
16áâà4,16áâà5,16áâà6,16áâà7,17/1
7700000000016860007
18,18áâà2,19,19/2áâà2,19/2áâà3,19,21
7700000000016860009
21áâà3,21áâà4,21áâà1,21
7700000000016860010
2,2áâà1,2áâà2,2áâà3,2áâà3,2áâà4
7700000000016860011
2áâà4,2áâà5,2áâà8,2áâà9,2áâà10
7700000000016860013
2áâà11,2áâà12,2áâà13,2áâà14
7700000000016860014
2áâà15,2áâà16,2áâà17,2áâà18
7700000000016860015
2áâà19,2áâà20,2áâà21,2áâà22
7700000000016860016
2áâà23,2áâà24,2áâà25,2áâà26
7700000000016860017
2áâà27,2áâà28,2áâà29,2áâà30
7700000000016860018
2áâà31,2áâà32,2áâà33,2áâà34
7700000000016860019
2áâà35,2áâà36,2áâà37,2áâà38
7700000000016860020
2áâà39,2áâà40,2áâà41,2áâà42
7700000000016860021
2áâà43,2áâà44,2áâà45,2áâà46
7700000000016860022
2áâà47,2áâà49,2áâà50,2áâà51
7700000000016860023
2áâà52,2áâà53,2áâà55,2áâà56
7700000000016860024
2áâà57,2áâà58,2áâà59,2áâà60
7700000000016860025
2áâà61,2áâà62,2áâà63,4áâà1,4áâà2
7700000000016860026
4áâà3,4áâà4,4áâà5,4áâà6,4áâà8,4áâà9
7700000000016860027
4áâà11,4áâà12,6
7700000000016860028
47,49
7700000000016860029
51,51áâà2,51áâà3,51áâà4,51áâà5,51áâà6
7700000000016860030
51áâà7,51áâà8,51áâà9,51áâà10,51áâà11
7700000000016860031
51áâà12,51áâà13,51áâà14,51áâà18,51
7700000000016860032
51áâà2,53,53,57,57áâà1,57áâà2,57áâà3
7700000000016860033
57áâà5,57áâà6,57áâà7,57áâà8,57áâà9
7700000000016860034
57áâà10,57áâà11,57áâà12,57áâà13
7700000000016860035
57áâà14,57áâà15,57áâà16,57áâà17
7700000000016860036
57áâà19,57áâà20,57áâà21,57áâà22
7700000000016860037
57áâà23,57áâà24,57áâà26,57áâà27
7700000000016860038
57áâà28,57áâà29,57áâà30,57áâà31
7700000000016860039
57áâà32,57áâà33,57áâà37,57áâà38
7700000000016860040
57áâà39,57áâà40,57áâà41,57áâà42
7700000000016860041
57áâà43,57áâà44,57áâà45,57áâà46
7700000000016860042
57áâà47,57áâà48,57ª1,57ª2,57ª2áâà4,59
7700000000016860043
59áâà2,61,61áâà1,61áâà3,61áâà4,61áâà5
7700000000016860044
61áâà20,61áâà3,61áâà4,61áâà5
7700000000016860045
61áâà6,61áâà7,96áâà4,96ª1,96ª1áâà1
7700000000016860046
96ª2,96ª3,96ª4,96ª5,96,98ª1,98ª1áâà2
7700000000016860047
98ª2,98ª3,98ª4,98ª5,98ª5áâà2,98ª6,100
7700000000016860048
102,102,104,104áâà2,106,106áâà1,106
7700000000016860049
108áâà1,108áâà2,108ª1,108ª2,108ª3,110/2
7700000000016860050
39áâà20,39áâà23,39áâà27,39áâà40,39,40
7700000000016860051
39áâà10,39áâà11,39áâà13,39áâà14
7700000000016860052
20ª1,22,23áâà2,23áâà3,23áâà5,23áâà7
7700000000016860053
23áâà15,23áâà16,23áâà17,23áâà18
7700000000016860054
23áâà3,23áâà1,24áâà2,24áâà3,24ª1
7700000000016860055
24ª2,25,25áâà1,25áâà2,25áâà3,25áâà4
7700000000016860056
25áâà5,25ª1,25ª2,25ª3,25áâà1,25áâà2
7700000000016860057
25áâà3,25áâà4,25áâà8,25áâà9
7700000000016860058
25áâà12,25áâà13,25áâà18,25áâà19
7700000000016860059
25áâà20,25áâà21,25áâà23,25áâà24
7700000000016860060
25áâà25,25áâà26,25áâà27,25áâà28
7700000000016860061
25áâà30,25áâà35,25áâà37,26áâà3,26ª1
7700000000016860062
26ª2,26ª3,26ª3áâà2,27,27áâà4,27áâà5
7700000000016860063
28ª1,28ª2,28ª2áâà2,29,29_35,29,30
7700000000016860064
30áâà1,31,32,33,34ª1,34ª2,35,36ª1,36ª2
7700000000016860065
37áâà5,37áâà6,37áâà7,37ª1,37ª2,38ª1
7700000000016860066
38ª2,38ª2áâà2,39,39áâà6,39áâà7,39áâà8
7700000000016860067
41ª1,41ª2,41,42,43áâà1,43áâà4,43
7700000000016860068
43áâà2,43áâà3,43áâà4,44,44áâà1
7700000000016860069
45áâà1,45áâà2,45áâà3,45áâà5,46,46áâà1
7700000000016860070
46,48ª1,48ª2,48ª3,50,50,52,52
7700000000016860071
52áâà3,52,52áâà1,52áâà2,54,56,56
7700000000016860072
56áâà4
7700000000016860073
52áâà1
7700000000016860074
58áâà2,58áâà5,58áâà6,58áâà7,58áâà7
7700000000016860076
45áâà1,45áâà2,45áâà3,58,58áâà1
7700000000016860077
58áâà8,58áâà9,58áâà10,58áâà12,58áâà14
7700000000016860078
58áâà17,58áâà21,58áâà24,58áâà26
7700000000016860079
71áâà2,71áâà6,71áâà7,71áâà8
7700000000016860080
71áâà10,71áâà13,71áâà14,71áâà15
7700000000016860081
71áâà16,71áâà17,71áâà18,71áâà19
7700000000016860082
23ª1,23ª1áâà1,23ª1áâà2,23ª3,23ª3áâà2
7700000000016860008
23ª3áâà3,23,23áâà2,23áâà3,23áâà4
7700000000016860083
23áâà5,23áâà6,23áâà7,23áâà8
7700000000016860084
23áâà9,23áâà10,23ª1,23ª1áâà2
7700000000016860085
23ª1áâà3,23ª1áâà4,23ª1áâà6
7700000000016860086
23ª1áâà7,23,23áâà2
7700000000016860087
63,63áâà4,63áâà5,63áâà6,63áâà7,63áâà8
7700000000016860088
63áâà9,63áâà10,63ª1,63áâà1,63áâà3
7700000000016860089
63áâà4,63áâà5,63áâà7,63áâà8
7700000000016860090
63áâà9,63,63,63áâà2,65áâà1,65áâà2
7700000000016860091
65áâà3,65áâà4,65áâà5,65áâà9,65áâà10,67
7700000000016860092
67áâà1,67áâà2,67áâà5,67áâà9,67áâà29
7700000000016860093
69áâà1,69áâà2,69áâà3,69áâà4,69áâà4
7700000000016860094
69áâà5,69áâà6,69áâà7,69áâà8,69áâà9
7700000000016860095
69áâà10,69áâà11,69áâà12,69áâà15
7700000000016860096
7700000000016860097
69áâà21,69áâà22,69áâà23,69áâà26
7700000000016860098
69áâà27,69áâà29,69áâà30,69áâà31
7700000000016860099
69áâà32,69ª1,71,71áâà1,71áâà2,71áâà5
7700000000016860100
71áâà20,71áâà1,71áâà2,71áâà3
7700000000016860101
71áâà4,71áâà6,71áâà7,71áâà8
7700000000016860102
71áâà9,71áâà10,71áâà11,71áâà12
7700000000016860103
71áâà13,71áâà14,71áâà15,71,71áâà1
7700000000016860104
71áâà2,71áâà3,71áâà1,73,73áâà1,77
7700000000016860105
77áâà2,77áâà3,77áâà7,77áâà8,77áâà1
7700000000016860106
77,77áâà1,77áâà2,77áâà3,112áâà1
7700000000016860107
112ª2,112ª2áâà3,112ª3,112ª4,112ª4áâà2
7700000000016860108
112ª4áâà5,112/1,112/1áâà1,112/1áâà3
7700000000016860109
112/1ª1,112/1ª2áâà2,114,116,116,118ª1
7700000000016860110
118ª1áâà1,118ª2,120,120áâà1,122
7700000000016860111
130ª1áâà1,130ª1áâà2,130ª2,130ª3,132
7700000000016860112
132áâà2,132áâà3,132,134,134áâà1
7700000000016860113
136áâà1,136áâà1
7700000000016860114
122áâà2,124áâà2,124áâà3,124ª1
7700000000016860115
124ª1áâà1,124ª3,124ª3áâà2,124ª3áâà3
7700000000016860116
124ª3áâà4,126,128,130áâà2,130ª1
7700000000016860117
58áâà29,58áâà30,58áâà31,58áâà32
7700000000016860118
58áâà53,58ª4,58ª17,58ª22,58ª45
7700000000016860119
61áâà6,61áâà7,61áâà8,61áâà10,61áâà17
7700000000016860012
81,83áâà2,85,87,89,91,93,95,97,99,99
7700000000016860120
101,103,105,107,109,111,113,115,117
7700000000016860121
119,121áâà1,121áâà3,123,125,127,129
7700000000016860122
131,133áâà1,133áâà2,135,137,141,143
7700000000016860123
145,147,149,151,153,155,157,161,163
7700000000016860124
165,167,169,170,171,171áâà1,172,173
7700000000016860125
175,176,177,178,179,180,181,182,183
7700000000016860126
185,186,187,188,189,189áâà1,189áâà2
7700000000016860127
190,191,192,193,194,195,197,199,201
7700000000016860128
203,205,209,211,213,215,217,221,223
7700000000016860129
225,227,227áâà2,227áâà3,229,229áâà2
7700000000016860130
231,235,237,239,245,247,249,251,253
7700000000016860131
255áâà1,255áâà2,255áâà3,257,261áâà1
7700000000016860132
261áâà2,263,265,267,269,271,273
7700000000016860133
275áâà1,275áâà2,275áâà3,277,279,281
7700000000016860134
283,291,295,297,299,299,301,303,305
7700000000016860135
307,309,309áâà1,309áâà1,309áâà2
7700000000016860136
311áâà1,311áâà2,311áâà3,311áâà4
7700000000016860137
311áâà5,311áâà6,311áâà7,311áâà8
7700000000016860138
311áâà12,311áâà13,311áâà14,311áâà15
7700000000016860139
311áâà1,311,311áâà2,311áâà3
7700000000016860140
62áâà1,62ª1,62ª2,62ª2áâà3,64ª1,64ª2
7700000000016860141
64ª3,66,66,68,70,72,74,78,80,80áâà1
7700000000016860142
82,84,84áâà1,84áâà2,84áâà4,86,88,88áâà1
7700000000016860143
311áâà4,311áâà5,311áâà6,311áâà7
7700000000016860144
88áâà2,92/1,92,94áâà1,94ª1,94ª1áâà2
7700000000016860145
94ª1áâà3,94ª1áâà4,94ª2,94ª3,94ª3áâà3
7700000000016860146
94ª3áâà11,94,94áâà2
7700000000016860147
196,196áâà2,198,200,202,206,208,210
7700000000016860148
141400
212,214,216,218,220,222,224,226,230
7700000000016860149
232,234áâà1,234áâà2,234áâà3,234áâà7
7700000000016860150
234áâà9,234áâà14,236,236áâà1,236áâà2
7700000000016860151
236áâà3,236áâà4,236áâà5,236áâà6
7700000000016860152
236áâà7,236áâà8,236áâà9,236áâà10
7700000000016860153
236áâà11,236áâà12,236áâà13,236áâà14
7700000000016860154
236áâà15,236áâà16,236áâà17,236áâà1
7700000000016860155
238,240,241,242áâà1,242áâà2,244,246
7700000000016860156
248,250,252,254,256,258,262,264,266
7700000000016860157
274,276,278,280,282,284,286,286,286
7700000000016860158
268,270,272
7700000000016860159
290áâà5,290áâà6,294,296,298,300,300
7700000000016860160
286áâà1,288áâà1,288áâà1,288áâà2
7700000000016860161
288áâà4,288áâà5,288áâà6,288áâà7
7700000000016860162
288áâà8,288áâà9,288áâà10,288áâà12
7700000000016860163
288áâà13,288áâà14,288áâà15,288áâà16
7700000000016860164
288áâà17,288áâà18,288áâà19,288áâà20
7700000000016860165
288áâà21,288áâà22,288áâà23,288áâà24
7700000000016860166
290,290,290áâà2,290áâà3,290áâà4
7700000000016860167
300áâà2,300áâà3,300áâà4,300áâà5
7700000000016860168
300áâà7,300áâà8,300áâà11,300áâà13
7700000000016860169
300áâà14,300áâà15,300áâà17
7700000000016860170
300áâà19,300áâà21,300áâà25
7700000000016860171
300áâà26,300áâà27,300áâà27
7700000000016860172
300áâà28,300áâà29,300áâà30
7700000000016860173
300áâà31,300áâà32,300áâà33
7700000000016860174
300áâà34,300áâà36,300áâà37
7700000000016860175
300áâà38,300áâà39,300áâà40
7700000000016860176
300áâà42,300áâà44,300áâà47,304,308
7700000000016860177
310,312,314,316,318,320,322,324,326
7700000000016860178
326áâà2,328,330,332,334,336,336,338
7700000000016860179
1/12,1/12áâà1,1/12áâà2,1/12áâà5
7700000000016880001
1/12áâà6,1/12áâà7,1/12áâà8,1/12áâà9
7700000000016880002
1/12áâà10,1/12áâà11,1/12áâà12
7700000000016880003
1/12áâà12,1/12áâà13,1/12áâà14
7700000000016880004
1/12áâà15,1/12áâà16,1/12áâà17
7700000000016880005
1/12áâà19,1/12áâà20,1/12áâà21
7700000000016880006
1/12áâà22,1/12áâà24,1/12áâà25
7700000000016880007
1/12áâà26,1/12áâà27,1/12áâà28
7700000000016880008
1/12áâà29,1/12áâà30,1/12áâà31
7700000000016880009
1/12áâà32,1/12áâà33,1/12áâà34
7700000000016880010
1/12áâà35,1/12áâà36,1/12áâà37
7700000000016880011
1/12áâà38,1/12áâà39,1/12áâà40
7700000000016880012
1/12áâà41,1/12áâà42,1/12áâà49
7700000000016880013
1/12áâà50,1/12áâà51,1/12áâà52
7700000000016880014
1/12áâà53,1/12áâà54,4,5,5ª1,5ª2
7700000000016880015
5ª2áâà1,5ª2áâà2,5ª2áâà3,5ª2áâà4,7,9
7700000000016880016
9áâà3,11áâà1,11áâà2,11áâà9,16áâà2,17
7700000000016880017
17áâà2,17áâà3,17áâà4,17áâà5,19,19áâà1
7700000000016880018
7700000000016880019
19áâà7,19áâà17,19áâà18,19áâà32,19ª1
7700000000016880020
19ª1áâà2,19ª2,19ª2áâà2,21áâà1,21áâà3
7700000000016880021
21ª1,23,23áâà2,23áâà3,23áâà4,23áâà5
7700000000016880022
23áâà6,23áâà7,23áâà8,23áâà10,23áâà11
7700000000016880023
7700000000016880024
23áâà16,23áâà17,23áâà18,23áâà19,26
7700000000016880025
7700000000016880026
26áâà7,26áâà8,26áâà11,26áâà15,26áâà16
7700000000016880027
26áâà17,26áâà18,26áâà20,26áâà21
7700000000016880028
26áâà22,26áâà23,26áâà24,26áâà25
7700000000016880029
26áâà26,26áâà27,26áâà28,26áâà29
7700000000016880030
26áâà30,26áâà31,26áâà34,26áâà35
7700000000016880031
26áâà39,26áâà40,26áâà41,26áâà46
7700000000016880032
26áâà55,26,30áâà1,30áâà2,32,32áâà2
7700000000016880033
32áâà3,32áâà4
7700000000016880034
113ª8,113/1,113/1áâà1
7700000000016890001
117198
113
7700000000016890002
115áâà1
7700000000016890003
127áâà1,127áâà2,127áâà3,127,129ª1
7700000000016890004
20ª1,20ª2,20ª2áâà1,20ª2áâà2,20ª2áâà3
7700000000016890005
20ª2áâà4,28ª2
7700000000016890007
123,123áâà1,123ª1,123ª1áâà1,123ª1áâà2
7700000000016890010
123ª1áâà3,123ª2,123ª3,123ª3áâà1
7700000000016890011
123ª3áâà2,123ª4,123,123áâà1,123
7700000000016890012
123,125ª1,125ª2,125ª3,125ª4,127
7700000000016890013
27áâà6,27áâà7,27áâà8,27áâà12,28,29
7700000000016890015
129ª1áâà1,129ª1áâà2,129ª2,129ª2áâà1
7700000000016890016
129ª3,129ª3áâà1,129ª3áâà2,129,131
7700000000016890017
131ª1,131ª1áâà1,131ª2,131ª3,131ª4,131
7700000000016890018
131áâà1,131áâà2,131,133,135áâà2
7700000000016890019
135ª1,135ª1áâà1,135ª1áâà2,135ª1áâà3
7700000000016890020
135ª2,135ª3,137ª1,137ª1áâà1,137ª2
7700000000016890021
137ª3,137áâà1,137áâà3,137,139,139áâà1
7700000000016890022
1áâà1,1ª2,1/2ª1,2,2áâà1,2/4,2,3,3áâà2
7700000000016890023
4áâà1,4áâà1,4áâà3,4áâà5,4ª1,4áâà23
7700000000016890024
7700000000016890025
7700000000016890026
6áâà13,6áâà19,6áâà20,6áâà21,6áâà1
7700000000016890027
6áâà3,7,7,8áâà,8áâà7,8áâà16,8áâà25
7700000000016890028
8áâà26,8áâà27,8áâà28,8áâà51,8áâà57,8ª1
7700000000016890029
8ª2,8ª4,8ª5,8ª6,8ª7,8ª8,8ª9,8ª10,8ª11
7700000000016890030
8ª12,8ª13,8ª14,8ª15,8ª17,8ª18,8ª19
7700000000016890031
8ª20,8ª21,8ª22,8ª23,8ª23áâà60,8ª24
7700000000016890032
8áâà1,9,10áâà4,10áâà6,10áâà13
7700000000016890033
10áâà24,10áâà25,10ª1,10ª2,10ª3,10ª4
7700000000016890034
10ª5,10ª6,10ª7,10ª8,10ª9,10ª10,10ª11
7700000000016890035
10ª12,10ª22,11áâà1,11áâà2,11áâà3
7700000000016890036
11áâà4,11áâà5,11áâà6
7700000000016890037
13,13,13áâà2
7700000000016890038
7700000000016890006
14,14áâà1,14áâà2,14áâà2,14áâà3,14áâà4
7700000000016890039
14áâà5,16áâà4,18ª2,18ª2áâà2,18ª2áâà3
7700000000016890040
20áâà2,20áâà3,21,22,23,23áâà2,24,25,26
7700000000016890008
26áâà2,27,27áâà2,27áâà3,27áâà4,27áâà5
7700000000016890009
12,15,15,16,16ª1,17,17áâà4,18,18áâà1
7700000000016890041
18áâà3,18,19áâà1,19áâà2,19áâà3,20
7700000000016890042
29áâà2,29áâà3,29áâà4,29áâà5,29áâà6
7700000000016890043
29áâà7,29áâà8,29áâà9,29áâà10,29áâà12
7700000000016890044
29áâà17,29áâà18,29áâà37,29áâà38,31
7700000000016890045
7700000000016890046
31áâà7,31ª1áâà1,31ª1áâà2,31ª1áâà3
7700000000016890047
31ª1áâà4,31ª2,31ª4,31ª4áâà2,31ª5
7700000000016890048
31ª5áâà2,31ª5áâà3,31ª5áâà4,33,33áâà2
7700000000016890049
33áâà3,33áâà4,33áâà5,33áâà6,33áâà7
7700000000016890050
33áâà8,33áâà9,33áâà10,33áâà11,33áâà12
7700000000016890051
33áâà13,33áâà14,33áâà15,33áâà20
7700000000016890052
33áâà21,33áâà22,33áâà23,33áâà25,35,35
7700000000016890053
35
7700000000016890054
46,50,51áâà1,51áâà2,51áâà3,51áâà4
7700000000016890055
42,42áâà1,42áâà2,42áâà3,42áâà4,42áâà5
7700000000016890056
119119
42áâà6,42ª4,42ª5,42ª6
7700000000016890057
70/11,72/2,75/9,75,77ª1,77ª1áâà2,77ª2
7700000000016890058
77ª2áâà1,79,79ª2,79ª3
7700000000016890059
74,74áâà1,76,76,78,78áâà1,78,78ª1
7700000000016890060
80,81/2,81/2áâà2,82/2,82/2áâà1
7700000000016890061
82/2áâà2,82/2áâà3,82/2ª1,82/2ª3,83
7700000000016890062
83áâà1,83ª2,83ª3,83ª4,83ª4áâà1,83ª5
7700000000016890063
83,83,83áâà1,85,85áâà2,85ª2,85ª3
7700000000016890064
85ª4,85ª5,85ª6,85,85
7700000000016890065
62/1,63ª2,63/2ª1,64/2,64,65ª1,65ª2
7700000000016890066
65ª3,65ª4,65ª5,66,66,67,67áâà1,67ª2
7700000000016890067
67áâà1,68/10,68/10áâà2,69,69áâà6,69ª2
7700000000016890068
69ª2áâà1,69ª3,69ª3áâà1,69,71,73/8
7700000000016890069
73/8áâà1
7700000000016890070
90/2áâà
7700000000016890014
86,86áâà1,86ª1,86,86,87,87áâà1
7700000000016890071
87áâà2,87,88,88áâà1,88áâà2,88áâà3
7700000000016890072
88ª1,88ª2,88ª2áâà1,88ª2áâà2,88ª3,88
7700000000016890073
89/2,89,90,90áâà1,90,90,91,91áâà1
7700000000016890074
91ª2,91ª3,91ª4,91ª4áâà1,91ª4áâà3,91
7700000000016890075
93,93áâà2,93ª2,93ª2áâà1,93ª3,93ª3áâà2
7700000000016890076
93ª4,93,93,93áâà1,95,95áâà2,95ª2
7700000000016890077
51áâà5,52,52áâà1,52áâà2,53áâà1,53áâà2
7700000000016890078
53áâà3,53áâà4,53áâà5,53áâà7,53áâà8
7700000000016890079
53áâà9,53áâà10,53áâà11,53áâà13,53áâà14
7700000000016890080
53áâà17,53áâà18,53áâà19,53áâà20,54
7700000000016890081
54áâà1,55/1áâà1,55/1áâà2,55/1áâà3,57
7700000000016890082
57áâà1,59áâà1,59áâà2,59áâà3,59áâà4
7700000000016890083
60/2,60,61/1,61/1áâà1
7700000000016890084
90áâà2
7700000000016890085
30,30áâà1,30áâà2,30áâà3,37,37áâà2,37ª1
7700000000016890086
37ª1áâà2,37
7700000000016890087
32,32áâà1,32,32áâà1,34ª2,34/1
7700000000016890088
34/1áâà1,34,36,36áâà1,38,38áâà1
7700000000016890089
38áâà9,38áâà11,38ª1,38ª2,38ª3,38ª5
7700000000016890090
38ª7,38ª33,38,39/1,39/1áâà1,39/1áâà2
7700000000016890091
39,39,40,40áâà1,40áâà1,41áâà1,41/2
7700000000016890092
41,41áâà1,43,43áâà1,43áâà2,43ª7,43ª8
7700000000016890093
43ª8áâà1,43ª9,43ª10,43ª11,43,43,44
7700000000016890094
44áâà1,44áâà1,45,45áâà1,45áâà2,45áâà3
7700000000016890095
45áâà4,45,45áâà1,45áâà2,47áâà1
7700000000016890096
47áâà2,47áâà3,47áâà4,47áâà5,47áâà6,49
7700000000016890097
7700000000016890098
49áâà6,49áâà7,49áâà8,49áâà9,49áâà10
7700000000016890099
49áâà11,49áâà12,49áâà13,49ª1,49ª2,49ª3
7700000000016890100
92,92ª1,92ª1áâà1,92,94,96,96áâà1
7700000000016890101
98ª1,98ª1áâà1,102,102áâà1,102áâà2,104
7700000000016890102
104áâà1,106ª1,108áâà1,108áâà2,108
7700000000016890103
108áâà1,110ª1,110ª2áâà1,110ª3
7700000000016890104
110ª3áâà1,110ª4,112,114,116áâà1,116ª1
7700000000016890105
109/1ª1,109/1ª2,109/1ª3,111ª1
7700000000016890106
119421
111ª1áâà1,111/2,111
7700000000016890107
118,122,126,128ª1,130áâà1,130ª1,130ª2
7700000000016890108
97ª1,97ª2,97ª2áâà1,97ª3,97ª4,99,99áâà1
7700000000016890109
99áâà2,99,101,101áâà1,101áâà2,101áâà3
7700000000016890110
103ª3,105,105ª2áâà1,105ª3,105ª4
7700000000016890111
105ª4áâà1,105áâà1,107,109/1áâà1
7700000000016890112
117áâà1,117ª1,117ª2,117ª3,117ª4,117ª5
7700000000016890113
142,144ª2,144ª3,144ª4,144ª4áâà2,144ª5
7700000000016890114
146,146áâà1
7700000000016890115
148,148áâà1,148,150,150,152,152ª2
7700000000016890116
152ª2áâà3,152,154,154ª2,154ª2áâà1
7700000000016890117
154ª2áâà3,156,156áâà1,156ª1,156ª2,158
7700000000016890118
164,166,166áâà,166áâà1,168áâà,170
7700000000016890119
2/21,3,3áâà2,4,5,5áâà1,6,7,7áâà2,8ª1
7700000000016910001
8ª2,9,10ª1,10ª2,10ª3,11áâà1,12,14
7700000000016910002
7700000000016910003
7700000000016910004
15áâà13,15áâà15,15áâà16,15áâà17
7700000000016910005
15áâà19,16,17,17ª1,18,19,19áâà2,21
7700000000016910006
21áâà1,23,23áâà1,23áâà7,23áâà8,24
7700000000016910007
1,1áâà1,8,16áâà7,22
7700000000016920001
7700000000016950001
7700000000016950002
2,3,3áâà1,3ª3,3,3,3,5,5áâà1,5áâà2
7700000000016960001
5,6,6,6áâà1,6áâà2,6,6,7,8,8áâà2
7700000000016960002
8,8,8áâà2,9,9áâà1,9áâà2,9,9,9,10
7700000000016960003
10,10áâà1,10,10,10áâà1,12,12áâà1
7700000000016960004
7700000000016960005
11,11,11,13,13áâà1,15,15áâà2,17
7700000000016960006
17áâà1,17áâà2,17,19,19áâà2,19,21
7700000000016960007
21áâà1,23,23,23áâà2,25,25áâà2,25
7700000000016960008
14,16,20,20áâà1,22,22áâà1,22,22áâà1
7700000000016960010
1,1áâà1,1áâà2,2,18,22,26,26,26
7700000000016960011
28ª1,30,30áâà1,30áâà2,30ª1,30ª1áâà1
7700000000016960012
30ª1áâà2,34,34áâà3,34,34
7700000000016960013
3,5,5,10,11,12,13,14,15,16,17,18,19
7700000000017020001
2áâà2,8,8áâà2,8ª1,14/20,16,18,20,22,24
7700000000017030001
7700000000017030002
3áâà1,3áâà1,3áâà2,3áâà4,3,5,5áâà2,9
7700000000017030003
9áâà2,9áâà3,9áâà4
7700000000017030004
11,13,13ª3,15ª1,15ª2,17ª1,19ª1,19ª2
7700000000017030005
21ª2,21/61ª1
7700000000017030006
71áâà1,71áâà2,95,95áâà1,95áâà2
7700000000017040001
98ª1áâà10,98ª2,98ª2áâà1,98ª2áâà2,99
7700000000017040004
99,99áâà1,99áâà2,99áâà3,99áâà4
7700000000017040002
99áâà8
7700000000017040003
99áâà3,99áâà10,99áâà5,99áâà6,99áâà7
7700000000017040005
7700000000017060001
2áâà1,2áâà2,2áâà3,2áâà4,4áâà1,4áâà2
7700000000017070001
4áâà3,4áâà4,4áâà5,4áâà12,4áâà13,4áâà14
7700000000017070002
6áâà1,6áâà2,6áâà6,6áâà7,6áâà8
7700000000017070003
6áâà9,6áâà10,8áâà1,10áâà1,10áâà2
7700000000017070004
10áâà3,10áâà4,10áâà5,10áâà6,16,18
7700000000017070005
18áâà1,18áâà3,18áâà4,20áâà1,20áâà1
7700000000017070006
20áâà2,20áâà3,20áâà4,20áâà7,20áâà8
7700000000017070007
5,5áâà2,7,7áâà2,9,11/10áâà1,11/10áâà2
7700000000017070010
11/10áâà3,11/10áâà4,11/10áâà5
7700000000017070011
11/10áâà6,11/10áâà7,11/10áâà8
7700000000017070012
11/10áâà9,11/10áâà10,11/10áâà11
7700000000017070013
11/10áâà12,11/10áâà13,11/10áâà14
7700000000017070014
11/10áâà16,11/10áâà17,11/10áâà18
7700000000017070015
11/10áâà19,11/10áâà20,11/10áâà21
7700000000017070016
11/10áâà22,11/10áâà23,11/10áâà24
7700000000017070017
11/10áâà25,11/10áâà26,11/10áâà27
7700000000017070018
11/10áâà28,11/10áâà30,13,13áâà1,13áâà2
7700000000017070019
13áâà4,13áâà5,13áâà6,13áâà8,13áâà9,13
7700000000017070020
13áâà1
7700000000017070021
7700000000017090001
4áâà1,4áâà3,5/7áâà4,8áâà1,8áâà2,8áâà4
7700000000017100001
10,12/50áâà2
7700000000017100002
1/36,3,5,6,6áâà1,6áâà2,6áâà3,6áâà4
7700000000017110001
7700000000017110002
6áâà11,7/23,14,14áâà2,16,17,17áâà2,18
7700000000017110003
19,20
7700000000017110004
1,2,2áâà1,2áâà2,3,6,10,11
7700000000017120001
1,3,3áâà1,6,6,8,8,9,11
7700000000017130001
2,2áâà2,2áâà3,2áâà4,2ª1,2ª1áâà1,2
7700000000017140001
2áâà1,2áâà2,2áâà3,2,2,3,4,4áâà2
7700000000017140002
4,5,6,6áâà3,6áâà4,6áâà5,7,7áâà2,8áâà1
7700000000017140003
7700000000017140004
8áâà8,8áâà9,8,11áâà1,12,12áâà2,12áâà3
7700000000017140005
12áâà4,12áâà9,12,12,14,16,16ª3
7700000000017140006
16ª4,16ª4áâà1,18ª1,18ª1áâà2,18áâà1
7700000000017140007
1/3,2/5,3,4,5,6,8/4
7700000000017150001
2/13ªáâà1,2/13ªáâà2,2/13ªáâà3,3,3
7700000000017160001
4áâà1,5áâà1,5,6/28áâà1,7,7,10,10áâà2
7700000000017160002
10áâà3,10áâà6,13,13áâà2,13áâà4
7700000000017160003
4,4áâà4,6ª1,6ª2,6ª3,6ª3áâà1,6ª3áâà3
7700000000017170001
117588
6ª3áâà4,6ª4,8,8áâà1,10ª1,10ª2,12,14ª2
7700000000017170002
18,18áâà1,18áâà2,20,22,26,26áâà1,28,30
7700000000017170003
30áâà2,34,34áâà1,42ª1,42ª2,44,44áâà1
7700000000017170004
44ª2,46ª1,46ª2,46ª2áâà1,46ª2áâà2,48
7700000000017170005
48áâà1
7700000000017170006
1,1áâà2,1áâà3,1,1áâà1,1áâà2,1áâà3
7700000000017170007
1áâà4,1áâà5,1áâà6,1áâà7,1áâà1
7700000000017170008
1áâà2,1áâà3,3ª2,3ª2áâà1,3ª2áâà2,3ª3
7700000000017170009
3ª4,3,3áâà1,5/10,5/10áâà1,5/10áâà2,7
7700000000017170010
7áâà1,9/7,9/7áâà1,9/7áâà2,9/7áâà3,11ª2
7700000000017170011
11ª3,11ª4,11ª5,11ª5áâà2,11ª5áâà3,11ª6
7700000000017170012
13/12,13/12áâà1,15ª1,15ª1áâà1,15ª1áâà2
7700000000017170013
15ª1áâà3,15ª1áâà4,15ª1áâà5,15ª1áâà6
7700000000017170014
15ª1áâà7,15ª2,15ª3,15ª5,15ª5áâà1
7700000000017170015
17áâà1,17áâà2,17ª3,17ª4,19,19áâà2
7700000000017170016
4áâà3,4ª1,4ª2,4ª2,4ª3,4,6,8
7700000000017180001
1ª1,1ª1áâà2,1ª2,2ª1,2ª2,2ª3,2,2áâà5
7700000000017190001
7700000000017190002
2áâà6,3ª1,3ª2,3ª2áâà3,3ª2áâà4,3ª3,3ª4
7700000000017190003
5,7áâà2,7ª1,7ª2,7ª2áâà1,7ª3,7ª4,8áâà1
7700000000017190004
8áâà7,8áâà14,8áâà15,8áâà16,8áâà18
7700000000017190005
8áâà19,8áâà21,8áâà22,8áâà23,8áâà24
7700000000017190006
3,4áâà1,4áâà2,4ª1,5,5áâà1,5áâà2,6,6
7700000000017210001
7áâà1,8,9ª1,9ª2,9ª3,10,10áâà1,10áâà2
7700000000017210002
10ª1,11,12,12áâà2,14
7700000000017210003
2/21,3,4,5,6,7áâà3,7ª1,7ª2,7ª2áâà3,8,9
7700000000017220001
10áâà1,10áâà2,12,12áâà2,12áâà3,42áâà2
7700000000017220002
11,11áâà1,11áâà2,13,13ª1,14áâà1
7700000000017240001
14áâà1,14áâà1,14áâà7,14áâà14,15,16
7700000000017240002
16,16áâà2,16áâà3,16áâà4,16áâà5
7700000000017240004
16áâà6,17,17áâà1,17áâà3,22áâà1,22áâà2
7700000000017240005
22áâà3,22áâà4,22áâà6,22áâà8,22áâà9
7700000000017240006
22áâà10,22áâà11,22áâà12,22áâà17
7700000000017240007
22áâà20,23ª1,23ª2
7700000000017240008
7700000000017240003
1áâà1,2áâà1,2áâà2
7700000000017240009
2,2,3,4,4,4áâà1,5,5áâà4,5áâà5,5,6
7700000000017250001
6,6áâà1,7,8,9,9áâà1,9áâà3,9,9áâà1
7700000000017250002
10,10áâà1,10áâà1,10áâà2,10áâà5,10áâà6
7700000000017250003
7700000000017250004
10áâà12,10áâà13,10áâà16,10áâà24,10ª3
7700000000017250005
11,12áâà5,12ª1,12ª1áâà1,12ª1áâà2,12ª2
7700000000017250006
12ª2áâà1,12ª2áâà3,12ª3,12ª3áâà1,12ª4
7700000000017250007
13,13áâà1,13áâà2,13,13áâà1
7700000000017250008
13áâà2,13áâà3,13áâà4,13áâà5
7700000000017250009
13áâà6,13áâà7,13áâà8,13áâà9
7700000000017250010
13áâà10,13áâà11,13áâà12,13áâà13
7700000000017250011
13áâà14,13áâà15,13áâà16,14,14áâà2
7700000000017250012
14,14,15áâà1,15ª1,15ª2,15ª2áâà2,17
7700000000017250013
17áâà2,17áâà5,18,18áâà2,18áâà5,18áâà12
7700000000017250014
18áâà13,19,19áâà1,19áâà2,19áâà3,19áâà4
7700000000017250016
7700000000017250017
19áâà10,19áâà11,19áâà12,19áâà13
7700000000017250018
7700000000017250019
19áâà18,19áâà19,19áâà147,19áâà148
7700000000017250020
19áâà150,20,20áâà2,21,21áâà1,21áâà2
7700000000017250021
21áâà2,21áâà3,21áâà3,21áâà4,21áâà5
7700000000017250022
7700000000017250023
21áâà11,21áâà12,21áâà13,21áâà14
7700000000017250024
4,7,8áâà1,8áâà2,8áâà3,9,9áâà1,9áâà2
7700000000017260001
9ª1,9ª1áâà1,9ª2áâà1,9ª3,9ª3áâà8,9ª4
7700000000017260002
9ª4áâà1,10,11áâà1,13áâà1,15áâà1
7700000000017260003
15áâà1,15áâà2,15ª2,15ª2áâà2,15ª2áâà3
7700000000017260004
17,17áâà1,19,19áâà1,19ª1,23áâà1,25áâà1
7700000000017260005
27áâà1,27ª1,27ª2,27áâà3
7700000000017260006
1áâà1,3áâà1,3áâà1,3áâà2,3áâà3,3áâà4
7700000000017260007
3áâà5,3áâà7,3áâà8,5áâà1,5ª1,5áâà2
7700000000017260008
14áâà2,14áâà4,14áâà6,14áâà7,18áâà1,22
7700000000017260009
22áâà2,29,29áâà1,29áâà2,31áâà1,31áâà2
7700000000017260010
31áâà3,31áâà5,31ª3áâà2,31ª4,31ª4áâà1
7700000000017260011
33áâà1,33áâà2,35áâà1,35áâà2,37áâà1
7700000000017260012
37áâà2,37áâà3,37áâà4,37ª3áâà1,37ª4
7700000000017260013
39áâà1,39áâà2,39áâà3,41,43,43áâà1
7700000000017260014
2áâà1,2áâà2,2áâà3,2áâà7,2áâà11,2
7700000000017270001
2áâà2,2áâà1,2áâà2,3,3,5,6áâà1,7,7
7700000000017270002
8áâà2,9,9,9áâà2,11/10,13,15,15ª2,17
7700000000017270003
19,19,19áâà1,21,21áâà2,21áâà3,21áâà4
7700000000017270004
7700000000017270005
21áâà10,23,29,31,31áâà1
7700000000017270006
25ª1,25ª1áâà1,25ª1áâà2,25ª1áâà3,25ª2
7700000000017280001
25ª2áâà1,25ª2áâà2,25ª2áâà3,25áâà1
7700000000017280002
25áâà2,25áâà3,25áâà5,25áâà6
7700000000017280003
áâà27,20,20áâà1,22ª1,22ª1áâà1
7700000000017280004
119234
25áâà7,25áâà8,25áâà9,25áâà10
7700000000017280005
25áâà19,27,27áâà1,27ª4,27ª4áâà1
7700000000017280006
27ª4áâà2,27ª4áâà3,27ª4áâà4,27ª10
7700000000017280007
27ª10áâà1,27ª10áâà2,27ª10áâà3,29ª1
7700000000017280008
29ª1áâà1,29ª1áâà2,29ª2,29ª2áâà1,29ª3
7700000000017280009
29ª3áâà1,29ª3áâà2,31ª1,31ª1áâà1,31ª2
7700000000017280010
31ª3,31ª4,31ª5,31ª6,31ª7,31ª7áâà1,33ª1
7700000000017280011
33ª2,33ª2áâà1,35,35,37,39,41,41ª1
7700000000017280012
41ª1áâà1,41ª2,43,43ª2,45,45áâà2
7700000000017280013
22ª1áâà2,28,34,34,34,36áâà1,36áâà2
7700000000017280014
36,36áâà1,38,38áâà2
7700000000017280015
7700000000017280016
3,4ª1,4ª2,4ª3,4ª4,6,6ª1,6
7700000000017280017
2áâà7,2áâà8,2/62áâà8,12,14,16,18,18,18
7700000000017280018
3ª1,3ª2,3ª2áâà2,3ª3,3ª4,5,5áâà1,5,7ª1
7700000000017280019
7ª1áâà2,7ª2,7ª3,7ª4,7ª4áâà1,7ª5,7,7
7700000000017280020
23áâà3,23ª1,23,23áâà1
7700000000017280021
13,15,15áâà1,17,19,21,23,23áâà2
7700000000017280022
1áâà4,1áâà5,1áâà6,1áâà2,1áâà3,3áâà1
7700000000017290001
3áâà2,3áâà3,4,5áâà1,5áâà2,5áâà3,5áâà4
7700000000017290002
5áâà5,6áâà1,6áâà2
7700000000017290003
1ª1,1ª2,1ª3,1ª3áâà2,1ª4,1ª4áâà2,2
7700000000017300001
2áâà2,2áâà3,2,3,4,4áâà2,5,6,6áâà2,7
7700000000017300002
7ª1,7ª2,7ª2áâà1,9,12,14,16,18,18áâà1
7700000000017300003
20,22,22áâà1,22áâà2
7700000000017300004
7700000000017310001
7700000000017310002
19áâà11,22,22áâà2,22áâà3,22áâà4
7700000000017310003
22áâà6,22áâà7,22áâà8
7700000000017310004
38áâà1,38áâà2,38áâà3,38áâà4
7700000000017310005
38áâà5,38áâà6,38áâà7,38áâà8
7700000000017310007
38áâà9,38áâà10,38áâà11,38áâà12
7700000000017310009
7700000000017310010
7700000000017310011
39áâà6,39áâà7,39áâà8,39áâà11,43áâà1
7700000000017310012
43áâà2,43áâà3,43áâà4,43áâà11,43áâà12
7700000000017310013
43áâà17
7700000000017310014
24áâà1,24áâà2,24áâà6,24áâà1,24áâà2
7700000000017310015
24áâà3,24áâà4,24áâà5,24áâà6,27áâà1
7700000000017310016
27áâà2,27áâà3,27áâà4,27áâà12,29áâà1
7700000000017310017
29áâà5,29áâà6,29áâà8,30áâà1,30áâà4
7700000000017310018
7700000000017310019
30áâà5,30áâà6,30áâà7,30áâà8
7700000000017310020
30áâà9,30áâà10,30áâà11,30áâà12
7700000000017310021
30áâà13,30áâà14,30áâà15,30áâà16
7700000000017310022
30áâà17,30áâà18,30áâà19,30áâà20
7700000000017310023
30áâà21,30áâà22,30áâà23,30áâà24
7700000000017310024
30áâà25,30áâà26,38áâà17,39áâà9
7700000000017310025
39áâà10,40ª1,40ª2,43áâà5,43áâà9
7700000000017310026
43áâà16,43áâà18,43áâà27,45áâà8,45áâà9
7700000000017310027
2áâà1,2áâà2,2áâà3,2áâà5,12,14áâà1
7700000000017310028
45áâà14,45áâà15,45áâà16,45áâà17
7700000000017310029
45áâà18,45áâà19,45áâà20,45áâà21
7700000000017310030
45áâà22,45áâà23,45áâà24,45áâà25
7700000000017310031
45áâà26,45áâà27,45áâà28,45áâà29
7700000000017310032
45áâà30,45áâà31,45áâà32,45ª1,45ª2
7700000000017310033
45ª2,45ª2,45ª3,45ª3,45ª4,45ª6,45ª7
7700000000017310034
45ª7,45ª7,45ª7,49áâà1,49áâà2,49áâà3
7700000000017310035
49áâà4,49áâà5
7700000000017310036
7700000000017310037
7700000000017310008
7700000000017320001
1/28,2/26,3,4,5,6,9,11,12/29,13,14,15
7700000000017360001
15,15,16,17,18,19,20,22,24,28,30
7700000000017360002
2áâà43,2/4áâà1,2/4áâà3,2/4áâà3
7700000000017370001
2/4áâà4,2/4áâà5,2/4áâà6,2/4áâà7
7700000000017370002
2/4áâà8,2/4áâà9,2/4áâà10,2/4áâà11
7700000000017370003
2/4áâà12,2/4áâà15,2/4áâà16,2/4áâà17
7700000000017370004
2/4áâà18,2/4áâà19,2/4áâà20,2/4áâà21
7700000000017370005
2/4áâà22,2/4áâà23,2/4áâà23,2/4áâà23
7700000000017370006
2/4áâà24,2/4áâà24,2/4áâà24,2/4áâà25
7700000000017370007
2/4áâà25,2/4áâà26,2/4áâà27,2/4áâà28
7700000000017370008
2/4áâà29,2/4áâà30,2/4áâà31,2/4áâà32
7700000000017370009
2/4áâà37,2/4áâà44,2/4áâà45,2/4áâà46
7700000000017370010
2/4áâà48,2/4áâà49,2/4áâà50,2/4áâà51
7700000000017370011
2/4áâà52,2/4áâà53,2/4áâà53,2/4áâà55
7700000000017370012
2/4áâà56,2/4áâà57,2/4áâà58,2/4áâà59
7700000000017370013
2/4áâà59,2/4áâà61,2/4áâà62,2/4áâà64
7700000000017370014
2/4áâà65,2/4áâà68,2/4áâà70,2/4áâà70
7700000000017370015
2/4áâà71,2/4áâà72,2/4áâà73,2/4áâà75
7700000000017370016
2/4áâà75,2/4áâà75,2/4áâà76,2/4áâà77
7700000000017370017
2/4áâà77,2/4áâà78,2/4áâà79,2/4áâà80,4
7700000000017370018
6áâà1,6áâà2,8áâà1,8áâà2,10,10áâà1
7700000000017370019
7700000000017370020
7700000000017370021
10áâà10,10áâà11,10áâà12,10áâà16
7700000000017370022
10áâà17,10áâà18,10áâà19,10áâà23
7700000000017370023
10áâà25,10áâà26,10áâà27,10áâà28
7700000000017370024
10áâà29,10,10áâà1,12
7700000000017370025
1,1áâà2,1,1áâà2,2áâà1,2áâà2,13,15
7700000000017380001
25áâà1,25áâà2
7700000000017380002
1,2,3,3áâà2,4,5,6,7,7áâà1,8,9,10,11
7700000000017390001
12,14,16,18,20,22,26,28,30,32,34,36,38
7700000000017390002
40,42,44,46,48,50
7700000000017390003
5áâà1,5áâà2,5áâà18,5áâà21,7,7,9
7700000000017400001
11áâà1,11áâà2,13,13,15,17,19
7700000000017400002
1,3áâà,3áâà,3,5,7,7,9
7700000000017410001
1,1ª1,3,3ª1,4,5,5ª1,6,7,7áâà1,7ª1,8,9
7700000000017420001
9ª1,10,10áâà1,10áâà2,11,11ª1,12ª1
7700000000017420002
12ª1áâà1,12ª1áâà2,12ª2,12ª3,13,14
7700000000017420003
14áâà1,14áâà2,14ª1,14ª1áâà1,14ª2,15
7700000000017420004
15áâà1,15ª1,16,16áâà1,16áâà2,16ª1
7700000000017420005
16ª1áâà1,16ª2,17,18,18áâà1,18áâà2,18ª1
7700000000017420006
3,4áâà1,4áâà2,7áâà1,7áâà2,7ª2,7ª2
7700000000017430001
9/23ª2
7700000000017430002
1,1áâà2,1áâà51,2áâà1,2,3,5,6áâà1
7700000000017450001
6áâà2,7áâà1,7áâà2,7áâà3,8áâà1,8áâà2
7700000000017450002
8áâà4,8áâà5,9áâà1,9áâà2,9áâà3,9áâà4
7700000000017450003
9áâà5,10,10áâà1,10áâà2,11áâà1,11áâà2
7700000000017450004
11áâà3,12,12áâà1,13áâà1,13áâà2,13áâà3
7700000000017450005
13áâà4,14,15áâà1,15áâà3,15áâà4,15áâà5
7700000000017450006
15áâà6,15áâà7,15áâà8,15áâà9,15áâà10
7700000000017450007
15áâà11
7700000000017450008
2,3áâà2,5áâà1,5áâà2,5áâà3,5áâà5,5áâà7
7700000000017460001
5áâà8,5,5áâà2,5áâà3,5áâà1,5áâà2
7700000000017460002
5áâà3
7700000000017460003
áâà1,áâà2,1áâà1,1áâà2,1áâà3,3áâà1
7700000000017470001
3áâà2,4,4áâà1,4,5áâà1,6áâà1,7áâà1
7700000000017470002
7áâà2,12áâà1,12áâà3,12áâà6
7700000000017470003
1,1,3áâà1,3áâà2,4áâà1,5áâà1,5áâà1
7700000000017480001
5áâà2,5áâà3,5áâà4,7áâà1,7áâà2,7áâà3
7700000000017480002
7áâà4,7áâà5,7áâà6,8,12áâà1,12áâà1
7700000000017480003
14áâà1,14áâà2,16áâà1,16áâà3,20
7700000000017480004
3,6,15áâà1,17áâà1,17áâà2,17áâà3,17áâà4
7700000000017490001
17áâà5,17áâà7,17áâà10,19áâà1,19áâà2
7700000000017490002
19áâà3,19áâà4,19áâà5,19áâà6,19áâà8
7700000000017490003
19áâà10,21áâà1,21áâà2,21áâà3,21áâà4
7700000000017490004
7700000000017490005
2,4áâà1,4áâà2,4áâà4,5áâà1,5áâà2,5áâà3
7700000000017500001
5áâà4,5áâà5,7áâà11,7/4áâà1,7/4áâà2
7700000000017500002
7/4áâà3,7/4áâà4,7/4áâà5,7/4áâà6
7700000000017500003
2áâà1,2ª1áâà1,2ª2áâà1,2ª2áâà2,2ª2áâà3
7700000000017510001
123458
2ª2áâà4,3áâà1,4,4áâà1,4áâà2,4áâà3,4ª1
7700000000017510002
4ª1áâà1,4ª1áâà2,4ª1áâà3,4ª1áâà4
7700000000017510003
4ª1áâà5,4ª1áâà6,4,5áâà1,6áâà1,7áâà1
7700000000017510004
7áâà1,8áâà1,8áâà2,9áâà1,10áâà1,10áâà2
7700000000017510005
11áâà1,11áâà2,12áâà1,13áâà1,13áâà2
7700000000017510006
14áâà1,15,16,17áâà1,17áâà2,18,18áâà1
7700000000017510007
19áâà1,19áâà2,20áâà1,21áâà1,22áâà1
7700000000017510008
23áâà1,23áâà2,24áâà1,26áâà2,28áâà1
7700000000017510009
29áâà1,30áâà1,31áâà1,32áâà1,33áâà1
7700000000017510010
34áâà1,35áâà1,36áâà1,37/24áâà1
7700000000017510011
37/24áâà2,37/24áâà3,38áâà1,39áâà1
7700000000017510012
40áâà1,41,43áâà3,45áâà1,45áâà2,46áâà1
7700000000017510013
47áâà1,48áâà1,48áâà2,48áâà3,48áâà4
7700000000017510014
49áâà1,49áâà2,51áâà1,51áâà2,53áâà1
7700000000017510015
55áâà1,57áâà2,59,61áâà1,61áâà2,63áâà1
7700000000017510016
65áâà1,65áâà2,69áâà1,69áâà2,71áâà1
7700000000017510017
71áâà4,73,73áâà2,73áâà17,75áâà1,77áâà1
7700000000017510018
79áâà1,81áâà1,81áâà2,83áâà1,85áâà1,87
7700000000017510019
87áâà1,87áâà2,89áâà1,93áâà1,93áâà1
7700000000017510020
95áâà1,97áâà1,97áâà2,99áâà1,101áâà1
7700000000017510021
103áâà1,103áâà2,105,105áâà9,111áâà1
7700000000017510022
115áâà1
7700000000017510023
65ª37
7700000000017520001
áâà1,áâà2,áâà3,áâà4,áâà7,áâà8,áâà9
7700000000017520002
áâà10,áâà11,1áâà1,1ª1,2,2,4áâà1,4áâà2
7700000000017520003
5,5ª1,5ª1áâà2,6,7,8,9áâà1,9ª1,10áâà1
7700000000017520004
12áâà1,13áâà1,14áâà1,15,16áâà1,17áâà1
7700000000017520006
18áâà1,19áâà1,20áâà1,21áâà1,22áâà1
7700000000017520007
22áâà2,23,23áâà1,23ª1,25,25áâà1,25áâà2
7700000000017520008
25áâà4,26áâà1,27áâà1,27áâà2,28áâà1
7700000000017520009
29áâà1,29áâà2,30áâà1,31áâà1,33áâà1
7700000000017520010
35áâà1,35áâà2,36áâà1,37áâà1,39,39áâà1
7700000000017520011
41áâà1,43áâà1,45áâà1,47áâà1,49áâà1
7700000000017520012
51áâà1,53áâà1,55,55ª1,55áâà1,57áâà1
7700000000017520013
59áâà1,61áâà1,61áâà2,63áâà2,63áâà4
7700000000017520014
63áâà5,63áâà6,63áâà7,63ª1áâà1,63ª1áâà2
7700000000017520015
63ª1áâà3,63,65ª1,65ª1áâà1,65ª2,65ª3
7700000000017520016
65ª4,65ª5,65ª6,65ª7,65ª9,65ª10,65ª11
7700000000017520017
65ª12,65ª13,65ª14,65ª15,65ª16,65ª17
7700000000017520018
65ª18,65ª19,65ª20,65ª21,65ª22,65ª23
7700000000017520019
65ª24,65ª25,65ª26,65ª27,65ª28,65ª29
7700000000017520020
65ª30,65ª31,65ª32,65ª33,65ª34,65ª35
7700000000017520021
65ª36,65ª38,65ª39,65ª40,65ª41
7700000000017520022
65ª41áâà1,65ª42,65ª43,65ª44,65ª45
7700000000017520023
65ª46,70áâà5,70áâà9,70áâà10
7700000000017520024
65ª8
7700000000017520005
7700000000017530001
5áâà1,5áâà1,10áâà1,10áâà2,12áâà1
7700000000017540001
2áâà1,2áâà2,2áâà3,2áâà5,4,6,7/8áâà1
7700000000017550001
8áâà1,8áâà2,9,11/12áâà1,11/12áâà2,12
7700000000017550002
12áâà2,12,13áâà1,13áâà2,15,26_28ª6
7700000000017550003
27áâà1,27áâà1,27áâà2,27áâà3,29áâà1
7700000000017550004
29áâà7,31áâà1,31áâà2,31áâà4,31áâà6
7700000000017550005
35áâà6,35áâà7,35ª7,35ª7,36áâà1,36áâà2
7700000000017550006
36/50,37,39áâà5,40áâà8,40áâà9,40áâà10
7700000000017550007
40ª7,41áâà1,41áâà2,41áâà3,43,43áâà2
7700000000017550008
51,53,53ª2,55,57
7700000000017550009
60,62,62ª1,64,64ª1,66,66ª1,68,68ª1
7700000000017550010
70áâà1,70áâà2,70áâà3,70áâà4,70áâà5,72
7700000000017550011
72áâà2,72
7700000000017550012
3,5
7700000000017560001
1áâà1,1áâà2,1áâà5,1áâà6,3áâà1,3áâà2
7700000000017570001
3áâà3,3áâà4,3áâà5,3áâà6,3áâà25,3áâà26
7700000000017570002
3áâà28,3/11áâà1,3/11áâà2,3/11áâà3
7700000000017570003
3/11áâà4,3/11áâà5,3/11áâà6,3/11áâà7
7700000000017570004
3/11áâà9,3/11áâà11,3/11áâà12,3/11áâà13
7700000000017570005
3/11áâà22,5,7/11áâà1
7700000000017570006
1/36áâà1,1/36áâà2,1/36áâà3,3áâà1,3áâà2
7700000000017580001
3áâà3,3áâà4,3áâà5,3,4áâà1,4áâà2,4áâà3
7700000000017580002
5áâà1,5áâà3,5/1áâà2,6áâà1,6áâà2
7700000000017580003
7/2áâà1,7/2áâà4,8áâà1,8áâà2,8áâà3
7700000000017580004
9áâà1,9áâà3,10/14áâà1,12áâà1,14áâà1
7700000000017580005
14áâà2,14áâà3,16,18áâà1,18áâà3,19ª1,20
7700000000017580006
21áâà2,22,23áâà2,23_29áâà1,23_29áâà2
7700000000017580007
24áâà1,24_26áâà2,24_26áâà2
7700000000017580008
2,2áâà2,2ª1,2ª1áâà1,4,4áâà2,4áâà3,6ª1
7700000000017590001
6ª2,6ª3,6ª3áâà1,8ª1,8ª2,10,10áâà1
7700000000017590002
10áâà2,10áâà3,10ª1,10ª2,10ª3,10ª3áâà1
7700000000017590003
10,12,12áâà2,14,14áâà1,16,16áâà1,16ª1
7700000000017590004
16ª1áâà2,18,18áâà2,22,22áâà1
7700000000017590005
1,3,5,6,6áâà1,7,7ª3,8,9,10,10áâà2,12,13
7700000000017620001
10,10áâà2,10áâà3,10áâà5,12,12áâà2
7700000000017630001
123007
13áâà1,13áâà2,13áâà3,13áâà4,13áâà6
7700000000017630002
13áâà7,13áâà9,13áâà11,13áâà13,13áâà22
7700000000017630003
7700000000017630004
7700000000017630005
14áâà11,14áâà12,14áâà14,14áâà15
7700000000017630006
14áâà21,14áâà23,14áâà25,14áâà36
7700000000017630007
14áâà37,16áâà1,16áâà2,16áâà3,16áâà4
7700000000017630008
16áâà5,16áâà6,16áâà7,16áâà9,16áâà10
7700000000017630009
16áâà11,16áâà12,16áâà15,16áâà16,17áâà1
7700000000017630010
17áâà4,17áâà5,17áâà8,17áâà9,17áâà10
7700000000017630011
17áâà16,17áâà18,17áâà24,18áâà1,18áâà2
7700000000017630012
18áâà3,19/2,20áâà1,20áâà2,20áâà3
7700000000017630013
20áâà4,20áâà5,20áâà6,21áâà1,21áâà2
7700000000017630014
21áâà3,21áâà6,21áâà7,21áâà8,21áâà9
7700000000017630015
7700000000017630016
21áâà15,21áâà16,21áâà17,21áâà18
7700000000017630017
21áâà19,21áâà20,21áâà25,22ª1,22ª1áâà18
7700000000017630018
22ª2,23,23áâà1,23áâà2,23áâà3,23áâà4
7700000000017630019
23áâà5,23áâà7,23áâà8,23áâà8,23áâà9
7700000000017630020
23áâà18,23áâà20,23áâà21,23áâà23
7700000000017630021
23áâà25,23áâà28,23áâà32,24áâà1,24áâà3
7700000000017630022
24áâà4,24áâà5,24áâà7,25,25áâà2,25
7700000000017630023
25áâà1,29áâà1,29áâà2,29áâà3,29áâà4
7700000000017630024
29áâà5,29áâà6,29
7700000000017630025
2áâà20,2áâà23,2áâà24,4áâà1,8,8áâà2
7700000000017630026
7700000000017630027
2áâà8,2áâà9,2áâà11,2áâà18,2áâà19
7700000000017630028
8áâà3,8áâà5,8áâà7,8áâà30,8áâà31,9áâà1
7700000000017630030
7700000000017630031
7700000000017630032
11/2áâà1,11/2áâà2,11/2áâà3,11/2áâà4
7700000000017630033
1áâà1,1áâà2,1áâà3,1áâà4,1/3áâà1,1áâà1
7700000000017640001
1áâà3,1áâà4,1áâà5,3áâà1,3áâà2,3áâà3
7700000000017640002
3áâà4,3áâà6,3áâà7,3áâà9,3áâà10,3áâà17
7700000000017640003
5áâà1,5áâà2,5áâà3,5áâà4,5áâà1,5áâà2
7700000000017640004
5áâà3,5áâà4,5áâà5,5áâà6,5áâà7
7700000000017640005
5áâà8,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000017640006
7áâà7,7áâà3,7áâà4,7áâà11,7áâà18
7700000000017640007
9áâà1,9áâà2,9áâà3,9áâà4,9áâà5,9áâà6
7700000000017640008
9áâà9,9áâà10,9áâà12,9áâà14,9áâà15
7700000000017640009
9áâà16,9áâà17,9áâà1,9áâà2,9áâà3
7700000000017640010
6áâà1,6áâà2,8áâà1,8áâà2,8áâà3
7700000000017640012
8áâà4,8áâà5,8áâà6,8áâà8,8áâà9
7700000000017640013
8áâà10,8áâà11,10áâà1,10áâà2,10áâà3
7700000000017640014
7700000000017640015
10áâà10,14áâà1,14áâà2,14áâà3
7700000000017640016
14áâà4,14áâà5,14áâà7,14áâà1
7700000000017640017
14áâà1,14áâà4,14áâà7,14áâà12
7700000000017640018
14áâà13,14áâà14,14áâà15,14áâà16
7700000000017640019
14áâà17,14áâà18,14áâà19,14áâà20
7700000000017640020
14áâà21,14áâà22,14áâà25,14áâà1
7700000000017640021
14áâà2,14áâà3,14áâà6,14áâà8,16áâà1
7700000000017640022
16áâà2,16áâà3,16áâà5,16áâà6,16áâà7
7700000000017640023
16áâà10,16áâà1,16áâà3,16áâà4
7700000000017640024
16áâà5,18,18áâà2,18áâà3,18áâà4,18áâà6
7700000000017640025
7700000000017640026
18áâà12,18áâà13,18áâà14,18áâà14
7700000000017640027
18áâà17,18áâà18,18áâà19,18áâà20,18
7700000000017640028
18áâà2,18áâà3,18áâà4,18áâà1,22áâà1
7700000000017640029
3áâà1,6áâà2,6áâà3,6áâà5,10áâà1,12áâà1
7700000000017650001
12áâà2,12áâà3,12áâà4,18áâà1,18áâà2
7700000000017650002
18áâà3,18áâà4,18áâà6,18áâà7,18áâà8
7700000000017650003
18áâà9,18áâà10,18áâà12,18áâà13,18áâà14
7700000000017650004
18áâà15,18áâà16,18áâà18,18áâà20,20,20
7700000000017650005
20,22,26áâà1,26,26,26áâà3,26
7700000000017650006
30áâà1,30áâà2,30áâà3,30áâà4,30áâà5
7700000000017650007
30áâà6,30áâà7,36,38,38áâà2,38áâà8
7700000000017650008
8,8áâà5,8áâà9
7700000000017650010
4,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5,4áâà7
7700000000017660001
7700000000017660002
4áâà13,4áâà14,4áâà15,4áâà19,4áâà28,4
7700000000017660003
7700000000017660004
4áâà6,4áâà7,4áâà8,4áâà16,4áâà17
7700000000017660005
4áâà18,4áâà19,4áâà20,5áâà1,5áâà2
7700000000017660006
7700000000017660007
5áâà9,5áâà10,5áâà11,5áâà13,7áâà1
7700000000017660008
7áâà2,7áâà3,7áâà4,7áâà5,7áâà6,7áâà7
7700000000017660009
7áâà7,7áâà8,7áâà9,7áâà11,7áâà12
7700000000017660010
7áâà13,7áâà14,7áâà16,7áâà18,11,11áâà2
7700000000017660011
11áâà3,11áâà9,13áâà1,13áâà2
7700000000017660012
4,4áâà2,4áâà4,4áâà6,4áâà9,5,6áâà1,8,8
7700000000017670001
10,10,10,11,11áâà4,12,12áâà2,14áâà1
7700000000017670002
14ª2,15,15áâà1,15áâà2,15áâà3,15áâà4
7700000000017670003
15áâà5,15áâà6,15áâà7,15áâà9,15áâà10
7700000000017670004
15áâà11,15áâà12,15áâà13,15áâà14
7700000000017670005
15áâà15,15áâà21,15áâà23,15áâà24
7700000000017670006
15áâà25,15áâà26,15áâà28,15áâà30
7700000000017670007
7700000000017670008
15áâà35,15áâà38,15áâà39,16,18,18áâà2,20
7700000000017670009
áâà1,8áâà1,8áâà2,8áâà9,8áâà10,8áâà11
7700000000017690001
8áâà12,8áâà1,8áâà2,8áâà3,8áâà4
7700000000017690002
8áâà5,8áâà6,8áâà7,8áâà8,8áâà9
7700000000017690003
8áâà10,9áâà1,9áâà2,9áâà3,9áâà4,9áâà5
7700000000017690004
7700000000017690005
9áâà12,9áâà13,9áâà26,11áâà1,11áâà2
7700000000017690006
11áâà3,11áâà5,11áâà6
7700000000017690007
5,5áâà1,5áâà2,5áâà3,5áâà4,5áâà8,5áâà10
7700000000017700001
5áâà11,5áâà12,5áâà13,5áâà17,5áâà18
7700000000017700002
10ª1,10ª2,11áâà1,11áâà2,11áâà3,11áâà4
7700000000017700003
11áâà5,11áâà6,11áâà7,11áâà8,11áâà9
7700000000017700004
11áâà10
7700000000017700005
7700000000017710001
4áâà8,4áâà11,4áâà12,4áâà13,4áâà14
7700000000017710002
4áâà15,5,5áâà3,5áâà4,5áâà5,7áâà1
7700000000017710003
7áâà2,7áâà3,7áâà4,7áâà5,7áâà6
7700000000017710004
7áâà7,7áâà8
7700000000017710005
1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà6,1áâà7
7700000000017720001
7700000000017720002
1áâà13,1áâà15,1áâà16,3áâà1,3áâà2,3áâà3
7700000000017720003
3áâà4,3áâà5,5,5,6ª11áâà23,7ª1,7ª2
7700000000017720004
1,2,3,3áâà2,5,5áâà2,7,9,11,11áâà2
7700000000017730001
11áâà3,13,15,17,17áâà1,19,19áâà2,21,23
7700000000017730002
23áâà1,25,25áâà2,27,27áâà2,27áâà3,27
7700000000017730003
4,5,5áâà3,7,7áâà1,8,8áâà2,10,10ª1,14
7700000000017740001
7700000000017740002
14áâà6,14áâà7,14áâà8,14áâà10,14áâà11
7700000000017740003
14áâà12,14áâà19,14áâà21,14áâà22,16
7700000000017740004
16áâà3,16áâà4,16áâà6
7700000000017740005
1áâà1,2,3,4,5áâà1,5áâà2,6,7,8,9,10,11
7700000000017750001
13,14,15,16,17,18,18,19áâà1,19áâà2,20
7700000000017750002
21,21áâà9,22,23,24,25,26,27,27áâà9,28,30
7700000000017750003
1/19,2/21áâà1,2/21áâà2,2/21áâà3,3áâà1
7700000000017760001
3áâà2,4áâà1,4áâà2,5áâà1,6áâà1,6áâà3,8
7700000000017760002
7700000000017760003
7700000000017770001
7700000000017770002
7700000000017770003
7700000000017770004
7700000000017770005
2áâà28,2áâà29,2áâà30,2áâà31,2áâà32
7700000000017770006
2áâà33,2áâà34,2áâà36,2áâà39,2áâà45
7700000000017770007
2áâà49,2áâà50,2áâà51,2,2áâà1,2áâà2
7700000000017770008
2áâà3,2áâà4,2áâà5,2áâà6,2,3,3áâà4
7700000000017770009
4,4áâà2,4áâà3,4áâà4,5,6áâà1,6áâà2
7700000000017770010
6áâà3,6áâà4,6áâà5,6áâà6,6áâà9,6áâà11
7700000000017770011
7700000000017770012
6áâà18,6áâà20,6áâà21,6áâà1,7,8áâà1
7700000000017770013
8áâà2,8áâà3,8áâà4,8áâà5,9,9,10áâà1
7700000000017770014
10áâà2,10áâà3,10áâà4,10áâà8,10áâà12,11
7700000000017770015
12,13,14,15,17ª1,17ª2,19ª1,19ª2,21
7700000000017770016
23ª1,23ª2,23ª2áâà2,25,29,31,31áâà2
7700000000017770017
31áâà3,33,35,37ª1,37ª2,37ª2áâà3,39,41
7700000000017770018
41áâà3,41ª2,43,43áâà5,43áâà6,43,45
7700000000017770019
45áâà2,45áâà3
7700000000017770020
4,5,5áâà1,6,8,10,12,14,16,16áâà1,18
7700000000017780001
1,3,4,5,5áâà1,5áâà2,6ª1,6ª2,7,8ª1
7700000000017790001
8ª2,8ª3,9,9áâà2,9áâà4,10ª1,10ª2,12ª1
7700000000017790002
12ª2,13ª1,13ª1áâà2,13ª1áâà3,13ª2,13ª3
7700000000017790003
14,14áâà1,14áâà2,14áâà3,15,16áâà1
7700000000017790004
7700000000017790005
16áâà7,16áâà9,17,18,18áâà1,19,19ª1,21
7700000000017790006
7700000000017790007
23,27áâà1,27áâà2,27áâà3,27áâà4,27áâà5
7700000000017790008
27áâà8,27áâà16,27,27
7700000000017790009
3,3áâà1,7,9/11,10,10áâà1,12,12áâà3
7700000000017800001
13/12,14ª1,14ª2,14ª3,16,16áâà1,16áâà2
7700000000017800002
17,28,30,30áâà1,32áâà1,32áâà2,32áâà2
7700000000017800003
32áâà3,32áâà4,32áâà6,32áâà9,32áâà16
7700000000017800004
42áâà1,42áâà3
7700000000017800005
1,1áâà2,3,4,5,6ª1,6ª2,7,8,8áâà1,8áâà2,9
7700000000017810001
2ª1,2ª2,3,3ª2,3ª2áâà1,3ª2áâà2,3ª2áâà3
7700000000017830001
4áâà5,5,5,5áâà1,6,6ª2,7,7áâà3,7ª1,8
7700000000017830002
8áâà2,8áâà3,8ª2,8ª2áâà10,9áâà1,10
7700000000017830003
14áâà1,14áâà2,14áâà4,14áâà5,14áâà6
7700000000017830004
14áâà7,14áâà8,14áâà9,14áâà10,14áâà11
7700000000017830005
14áâà12,14áâà13,14áâà14,15,16áâà1
7700000000017830006
7700000000017830007
16áâà7,16áâà8,16áâà9,16áâà10,18,19
7700000000017830008
20áâà1,20áâà2,20áâà3,21áâà15,21áâà16
7700000000017830009
21áâà17,21ª1,21ª1áâà1,21ª1áâà2,21ª2
7700000000017830010
21ª3,21ª4,21ª5
7700000000017830011
22áâà1,22áâà2,22áâà4,22áâà5,22áâà6
7700000000017830012
22áâà8,22áâà10,22áâà11,22áâà12,22áâà14
7700000000017830013
27,27ª2,29,29áâà2,31
7700000000017830014
2,2ª1,2ª2,4,6,8,8áâà1,8áâà2,10ª2
7700000000017840001
10ª2áâà1,12,14ª1,14ª2,14ª2áâà2,18ª1
7700000000017840002
18ª2,18ª2áâà1,20,22ª1,22ª2,22ª2áâà2
7700000000017840003
7,7áâà2,7áâà3,7,9,9áâà2,11,11áâà2
7700000000017840004
1,1áâà2,1ª2,3,3áâà2,3ª2,3ª2áâà2,3ª3
7700000000017840005
5ª1,5ª2,5ª2áâà3
7700000000017840006
2_10áâà1,2_10áâà2,2_10áâà3,7,7áâà1
7700000000017860001
7áâà2,7áâà3,9áâà1,9áâà2,9áâà4,9áâà5,11
7700000000017860002
11áâà3,11áâà4
7700000000017860003
1,4áâà1,4áâà2,5,6,8,8áâà2,9,9áâà2
7700000000017870001
10áâà1,10áâà1,10áâà2,10áâà3,10áâà7,11
7700000000017870002
7700000000017870003
2,2áâà1,2áâà19,5áâà1,5áâà2,5áâà3,5áâà4
7700000000017880001
5áâà5,5áâà6,5áâà7,5áâà8,5áâà11,5áâà20
7700000000017880002
5áâà21,5áâà26,7áâà1,7áâà2,7áâà3,7áâà4
7700000000017880003
7áâà6,7áâà7,7áâà8,7áâà11,7áâà13,7áâà15
7700000000017880004
7700000000017880005
7áâà21,7áâà23,7áâà24,7áâà25,7áâà27
7700000000017880006
7áâà31,7áâà33,7áâà41,7áâà42,10,12,16
7700000000017880007
18,20,24
7700000000017880008
1áâà2,1ª1,2áâà2,3áâà1,3áâà2,3áâà3
7700000000017920001
7700000000017920002
4áâà1,4áâà2,4áâà3,4áâà4,5,5áâà2,5áâà4
7700000000017920003
7,9,9áâà2,9áâà2,9áâà3,9ª2,10áâà1
7700000000017920004
14/16áâà1,16,16áâà1,18/8áâà1,20áâà1
7700000000017920005
20áâà4,20áâà5,20áâà6,20áâà8,20áâà9
7700000000017920006
20áâà10,20áâà14,22áâà1,22áâà1,22áâà2
7700000000017920007
22áâà4,24,24áâà2,34áâà1,34áâà1,34áâà2
7700000000017920008
34áâà3,34áâà5,34áâà6,34áâà7,34áâà9
7700000000017920009
34áâà18,34ª4,34ª5,34ª6,34ª7,34ª8,34ª10
7700000000017920010
34ª11,36,38,38áâà1,38áâà2,38áâà3,38áâà6
7700000000017920011
7700000000017930001
1/7áâà1,1/9,10,15áâà1,15áâà2,22áâà1
7700000000017940001
22áâà2,22áâà3,26
7700000000017940002
2,2áâà2,2/14áâà2,7áâà21,8,8áâà2
7700000000017960001
1,1áâà1,1ª1,1ª1áâà1,1ª2,1ª2áâà1,1ª3
7700000000017970001
3,3ª1,3,7áâà1,7/9,11,16
7700000000017980001
8áâà1,8áâà2,8áâà3,8áâà4,9áâà1,9áâà2
7700000000018010001
7700000000018020002
1áâà1,1áâà2,1áâà3,1áâà4
7700000000018030001
8,8áâà1,11/15,17,17áâà2,21/23
7700000000018040001
2,10/14,10,12,12áâà2,14,14,14,14
7700000000018050001
16,20,20ª1,22,24
7700000000018050002
40áâà1,40áâà2,40áâà3,40áâà4,40áâà5
7700000000018060001
7700000000018060002
5,5áâà1
7700000000018060003
3/9
7700000000018060004
3/7,4ª1,4ª2,4ª3,4,6,6áâà1,17,17áâà1
7700000000018070001
19,19áâà1,19áâà2,22/28,30,30áâà2
7700000000018070002
3/5,10,10áâà2
7700000000018080001
1,1áâà1,4,4,4áâà1,6,6áâà1,8,8áâà2,8
7700000000018090001
8áâà1,9/11,12áâà1,12áâà2,12áâà3
7700000000018090002
7700000000018090003
7700000000018090004
12áâà14,12áâà15,12áâà16,12áâà17
7700000000018090005
12áâà18,12áâà19,12áâà20,12áâà21
7700000000018090006
12áâà23,12áâà24,12áâà25,12áâà26
7700000000018090007
3/7,13,15,15áâà1,50
7700000000018100001
23áâà1
7700000000018110001
1,1áâà1,1,1,3
7700000000018120001
3áâà1,7áâà1,11,13áâà1,13áâà2,13áâà3
7700000000018130001
7700000000018130002
30áâà6,30áâà9,30áâà10,30áâà11,30áâà12
7700000000018130003
30áâà13,30áâà14,30áâà15,30áâà19
7700000000018130004
30áâà20,30áâà23,30áâà24,30áâà25
7700000000018130005
30áâà26,30áâà27,30áâà28,30áâà29
7700000000018130006
30áâà32,30áâà34,30áâà41,30áâà43
7700000000018130007
6áâà1,6áâà2,6,8áâà1,8áâà2
7700000000018140001
7700000000018150001
1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,2,2áâà2
7700000000018170001
2áâà3,4,4,5,6,6,9,9,10,11,13áâà1
7700000000018170002
13áâà2,13áâà3,13áâà4,13áâà5
7700000000018170003
1,1áâà1,1,2,3,5,5áâà2,6,6,7ª1,7ª2,8
7700000000018180001
8,9áâà1,9áâà2,9áâà3,10,11ª1,11ª2,13
7700000000018180002
15,15ª2,15ª2áâà2,15ª2áâà3,17,19,23
7700000000018180003
1,3,5,7,7áâà2,7áâà3,9,11,15,15áâà1
7700000000018190001
15áâà2,17,21,23,27áâà3,27ª1,27ª2
7700000000018190002
27ª2áâà3,29,29
7700000000018190003
2,4,6,6áâà2,8,8áâà5,10,10áâà4,10áâà6
7700000000018190004
12,12áâà9,14,14áâà2,14áâà3,16,16áâà3
7700000000018190005
18,18,18áâà2,18áâà3,18áâà4,18áâà5
7700000000018190006
18áâà6,18áâà7,18áâà8,18áâà9
7700000000018190007
18áâà10,18áâà11,18áâà12,18áâà13,20
7700000000018190008
20áâà1,20áâà2,20áâà4,22,24,26,28
7700000000018190009
28áâà2,28áâà3,28ª2
7700000000018190010
9,9/35ª1,11áâà2,11áâà3,11ª1,11ª2,15
7700000000018200001
15áâà2,15áâà3,15áâà4,15áâà5,15áâà6
7700000000018200002
15áâà17,15áâà18,15áâà19,15áâà20,15áâà21
7700000000018200003
3,5,5áâà2,5áâà9,5áâà21,5ª1,5ª2,5ª3,5ª4
7700000000018200004
5ª5
7700000000018200005
19,19áâà4,19áâà5
7700000000018200006
6áâà2,6ª1,6ª1áâà1,6ª1áâà2,6ª2,8,10
7700000000018200007
10áâà,10áâà1,10áâà2,10áâà1,14,14áâà1
7700000000018200008
14áâà2,16,18,20
7700000000018200009
1,3,3,4,6,6,6áâà2,6áâà3,6áâà4,8
7700000000018210001
2,4ª1,4ª1áâà3,4ª2,4ª3,4ª3áâà1,4ª4,4ª5
7700000000018220001
1,1áâà2,1ª1,1ª2,1ª2áâà1,1ª2áâà2
7700000000018220002
119517
1ª2áâà3,1ª3,1áâà1,1áâà2,1áâà3
7700000000018220003
1áâà4,1áâà5,1áâà6,1,3,3áâà2,3áâà3
7700000000018220004
3ª1,5,7,7áâà1,7áâà2,9,10ª2,10ª2áâà2
7700000000018220005
10ª3,10ª4,10ª5,10ª5áâà2,16,16áâà2,16ª1
7700000000018220006
18ª1,18ª2,18ª3,20ª1,20ª2,20ª3,24,26
7700000000018220007
26ª1,28,28áâà2,28ª1,30,32ª2,34ª1,34ª2
7700000000018220008
34ª3,36,36áâà1,36ª1,36ª2,38,38áâà2
7700000000018220009
38ª1,42ª1,42ª1áâà2,42ª2,42ª3,42ª3áâà1
7700000000018220010
42ª4,42ª5
7700000000018220011
1,1/1áâà1,1/1áâà3,1,2,3,3,4,5,5,6
7700000000018230001
6,7ª1,7ª2,7ª3,7ª3áâà2,7ª4,21,21,23
7700000000018230002
1áâà1,1áâà1,1áâà2,1áâà3,1áâà4
7700000000018240001
1áâà4,1áâà5,1áâà6,1áâà7,1áâà8
7700000000018240002
1áâà9,1áâà11,1áâà12,1áâà18,1áâà28
7700000000018240003
1áâà52,1áâà60,1áâà63,1áâà65
7700000000018240004
1áâà66,1áâà67,1áâà68,1áâà69
7700000000018240005
1áâà70,1áâà71,1áâà72,1áâà73,10áâà1
7700000000018240006
7700000000018240007
7700000000018240008
7700000000018240009
10áâà19,10áâà1,15/17áâà1,15/17áâà2
7700000000018240010
15/17áâà3,15/17áâà4,15/17áâà5
7700000000018240011
15/17áâà6,15/17áâà7,15/17áâà8
7700000000018240012
15/17áâà9,15/17áâà10,15/17áâà11
7700000000018240013
15/17áâà12,15/17áâà13,15/17áâà14
7700000000018240014
15/17áâà15,15/17áâà16,15/17áâà17
7700000000018240015
15/17áâà18,15/17áâà19
7700000000018240016
14,14áâà2,14áâà3,14,14áâà2,16,16
7700000000018240017
16áâà1,16áâà2,16áâà3,16áâà6,16
7700000000018240018
16áâà1,16áâà2,16áâà5,18,18áâà3
7700000000018240019
18áâà10,18áâà1,19ª1,19ª1áâà1,19ª2
7700000000018240020
19ª3,20áâà1,20áâà2,20áâà3,20áâà4
7700000000018240021
20áâà5,20áâà6,20áâà7,20áâà8,20áâà12
7700000000018240022
20áâà13,20áâà14,20áâà15,20áâà16
7700000000018240023
20áâà17,20áâà18,20áâà20,23áâà1,23áâà2
7700000000018240024
23ª2,23ª4,23ª5,23/7áâà3,23/7áâà6,23/7ª1
7700000000018240025
7700000000018250001
1,1áâà2,2/13áâà1,3áâà1,3áâà2,3,5áâà1
7700000000018260001
6áâà1,6áâà2,6áâà4,6áâà7,9áâà1,10áâà1
7700000000018260002
10áâà2,11áâà1,11áâà2,13áâà1,14,16,17
7700000000018260003
18áâà1,18áâà2,18áâà3,19,20áâà1,21,22
7700000000018260004
24,26áâà1,26áâà2,28/20áâà1,28/20áâà2
7700000000018260005
11áâà1,15/13
7700000000018270001
2,3,10áâà6,11
7700000000018270002
1,2,3,4,5,6,7,8,9,10,11,12áâà1,12áâà2
7700000000018280001
13,14,15,16,17,18,19,20áâà1,21áâà1,22
7700000000018280002
23,24,25,25,26,27,28,29,30,31,31áâà2
7700000000018280003
31áâà6,32,33,34,35,37áâà1,37áâà2
7700000000018280004
3,5,5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000018310001
5áâà6,5/10áâà9,5/10áâà18,6,6áâà1,8,12
7700000000018310002
1ª1,1ª1áâà2,1ª1áâà3,1ª2,1ª3,2ª1
7700000000018320001
2ª1áâà2,2ª2,2ª2áâà2,2ª3,2,3,4ª1
7700000000018320002
4ª1áâà2,4ª1áâà3,4ª2,5ª1,5ª2,5ª3
7700000000018320003
5ª3áâà2,5ª3áâà3,5ª3áâà4,5ª4,5ª5,5ª6
7700000000018320004
5ª6áâà1,5ª7,5,5ª1,5,5áâà2,5,6,6
7700000000018320005
6áâà1,7,7áâà1,7áâà2,7áâà8,7ª1,7ª1áâà1
7700000000018320006
7ª1áâà2,7,8ª2,8ª2áâà1,8ª3,9,9,9áâà2
7700000000018320007
10,10áâà2,11,11áâà2,11áâà3,11áâà4,11
7700000000018320008
12áâà3,12ª1,12ª1áâà2,12ª1áâà3,12ª1
7700000000018320009
12ª2,12ª2áâà2,12ª2áâà5,12,14ª1,14
7700000000018320010
14áâà2,14áâà3,14
7700000000018320011
9,9áâà2,10áâà1,10áâà2,10áâà3,10áâà4
7700000000018330001
10áâà5,11,13,15,17ª1,17ª2,18/30,19
7700000000018330002
19áâà3,20/19,22áâà1,22áâà2,26,28áâà1
7700000000018330003
32,34,34áâà2,37áâà1,38,38áâà2
7700000000018330004
4áâà1,14,28áâà1,28áâà13,28áâà17
7700000000018340001
28áâà1,30áâà1,30áâà2,31áâà1,31áâà2
7700000000018340002
1,1,1,2,2,2,3,4,4,5/1,5/4,5,6,6
7700000000018350001
7,8,8áâà1,8áâà2,8,8,8,8áâà1,10
7700000000018350002
10áâà1,28,30,30áâà2,30,32,34
7700000000018350003
3,3áâà1,3áâà2,3,4,4áâà1,4áâà2
7700000000018360001
7700000000018360002
7700000000018360003
7700000000018360004
7700000000018360005
4áâà21,4áâà22,4áâà23,4áâà24
7700000000018360006
4áâà25,4áâà27,4áâà28,4áâà29
7700000000018360007
4áâà32,4áâà33,4áâà34,4áâà35
7700000000018360008
4áâà36,4áâà37,4áâà38,4,4áâà1
7700000000018360009
4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000018360010
4áâà6,4áâà7,4áâà8,5,5áâà,5ª1,7ª1
7700000000018360011
7ª1áâà1,7ª2,10,10áâà13,11,12áâà1
7700000000018360012
7700000000018360013
7700000000018360014
12áâà12,12áâà14,12áâà15,12áâà16
7700000000018360015
7700000000018360016
12áâà21,13,15,17,17,19,19ª2,19ª3,19
7700000000018360017
2,2áâà1,3,4,4áâà2,4,6
7700000000018380001
1,1áâà2,1áâà1,1áâà2,1áâà3,1áâà1,2
7700000000018390001
2áâà1,3,4,5,6,7,8,9,11,12,13,14,15,16
7700000000018390002
17,18,19,20,21,22,23áâà1,23áâà2,23,24
7700000000018390003
25,25,26,27,28,29,30,31,32,33,34,35
7700000000018390004
36áâà1,36áâà2,37,38,39áâà1,39áâà2
7700000000018390005
39áâà3,39_3,40,41,42,43,44,45,47,48,49
7700000000018390006
1,1/3áâà1,6áâà1,6áâà2,8/1áâà1,10áâà1
7700000000018400001
7700000000018410001
18,20ª1,24ª1,24ª2,26ª1,26ª2,28ª1,28ª2
7700000000018420001
28ª2áâà1,28ª2áâà2,28ª3,28ª4,30,30áâà1
7700000000018420002
32,32áâà2,32áâà3,32ª1,32ª2,32ª2áâà1
7700000000018420003
32ª3,32ª3áâà1,32áâà1,32áâà2,32,32
7700000000018420004
34,36,36áâà1,36áâà2,36áâà3,36áâà4
7700000000018420005
36áâà5,38ª1,38ª1áâà2,38ª2,38ª2áâà1
7700000000018420006
38ª2áâà2,38ª3,40
7700000000018420007
3,5,5,7,9,11ª1,11ª1áâà1,11ª2,13ª1
7700000000018420008
13ª2,13ª3,13ª3áâà2,13ª3áâà3,15ª1,15ª2
7700000000018420009
17áâà2,17ª1,17ª2,17ª2áâà1,19ª1,19ª2
7700000000018420010
19ª3,21,21áâà2,21áâà4,21ª2,23áâà1,23ª1
7700000000018420011
23ª1áâà1,23ª1áâà3,23ª2,25,25áâà2,27
7700000000018420012
27áâà1,29
7700000000018420013
1,1áâà1,2,2áâà1,3,3ª2,4,5,6,8,10
7700000000018430001
10áâà3,12
7700000000018430002
5/1,5/1áâà2,7/2,8áâà1,8áâà4,8áâà5,9,10
7700000000018440001
11áâà1,11áâà2,13,13áâà2,13áâà3,14
7700000000018440002
14áâà2,15,18áâà1,18áâà2,20áâà1,20áâà2
7700000000018440003
22,22áâà3
7700000000018440004
1ª3,1/17áâà1,1/17áâà2,1/17áâà4,2,3
7700000000018470001
7áâà1,7áâà1,7áâà4,8,9/14áâà1,10,12
7700000000018470002
12áâà2,13,14,17áâà1,17áâà2,17ª1,22
7700000000018470003
1/15,3,4áâà1,4áâà18,5áâà1,5áâà1
7700000000018480001
5áâà12,6,7áâà2,7áâà1,7áâà4,8áâà1
7700000000018480002
8áâà2,10/16,18áâà1,18áâà2,19áâà1
7700000000018480003
19áâà3,22,22áâà1,22áâà2,34/15
7700000000018480004
2ª2,3,3áâà2,4ª1,4ª2,5ª1,7,7áâà1,8,9
7700000000018490001
3,4,5,6,6áâà1,7,7ª1,7ª1áâà1,7ª1áâà2,8
7700000000018500001
8áâà3,8ª1,8ª2,8ª3,9,9áâà1,10,10áâà1
7700000000018500002
10ª1,10ª2,10ª3,11,11áâà1,11,11,13,15
7700000000018500003
15áâà1,17,17ª1,19,21ª1,21ª1áâà1,21ª2
7700000000018500004
21ª2áâà2,21ª3,21ª3áâà1,21,21áâà1
7700000000018500005
21áâà2,21áâà1
7700000000018500006
30,30áâà1,30áâà2,32,32áâà2,32ª1,32
7700000000018500007
32,34,36ª1,38,38áâà1,38áâà2,40,40áâà1
7700000000018500008
51ª1,51ª1áâà1,51ª1áâà2,51ª1áâà3,51ª2
7700000000018500009
53,53ª1,53ª1áâà1,55,55áâà1,55áâà2
7700000000018500010
55áâà3,55,55áâà1,57ª1,57ª2,59,59áâà1
7700000000018500011
59ª1
7700000000018500012
40ª1,42,42,44,44áâà1,44áâà5,44,61
7700000000018500013
63,65ª1,65ª2,65ª3,65ª4
7700000000018500014
16áâà1,16/10áâà1,16/10áâà2,16/10áâà4
7700000000018500015
16/10áâà5,16/10ª1,16/10ª2,16/10ª3
7700000000018500016
16/10ª4,16/10ª5,16/10ª6,16/10ª7
7700000000018500017
16/10ª8,16/10ª9,16/10ª10,16/10ª11
7700000000018500018
16/10ª12,16/10ª13,16/10ª14,16/10ª15
7700000000018500019
16/10ª16,16/10ª17,16/10ª18,16/10ª19
7700000000018500020
16/10ª20,16/10ª21,16/10ª22,16/10ª23,18
7700000000018500021
18ª1,18ª1áâà1,18ª2,18/1,18/1áâà1,18/2
7700000000018500022
18,18áâà1,18áâà1,20,20áâà1,20áâà2
7700000000018500023
20,22,22áâà1,22áâà2,22,24,28,28
7700000000018500024
39ª1,39ª2,39ª2áâà1,39ª2áâà2,39,41,41
7700000000018500025
25,27ª1,27,29ª1,29ª2,29ª2áâà2
7700000000018500026
29ª2áâà3,29ª2áâà4,29ª2áâà5,29ª2áâà6
7700000000018500027
29ª3,29ª3áâà1,29ª3áâà2,31,31áâà1,35,37
7700000000018500028
43,43áâà1,47áâà1,47áâà2,47áâà3,47áâà4
7700000000018500029
47áâà5,47
7700000000018500030
23,23ª2,23áâà1
7700000000018500032
1,1áâà1,2,2,2,3ª1,3ª2,3ª2áâà1,3ª3
7700000000018510001
3ª4,4,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000018510002
4áâà6,4áâà7,4,4áâà3,4áâà4,4ª1,4ª2
7700000000018510003
4,4,5ª1,5ª2,5,6áâà1,6áâà2,6áâà3
7700000000018510004
6áâà3,6áâà4,7ª1,7ª2,7ª3,7,8,8ª1
7700000000018510005
8áâà1,8áâà2,8,9áâà2,9ª1,9ª2,9ª2áâà1
7700000000018510006
9,9,10,10áâà2,10,10áâà1,10,11ª1
7700000000018510007
11ª2,11,12,12áâà1,12,12,12áâà1
7700000000018510008
12áâà2,12,12,12,12áâà1,12áâà2
7700000000018510009
13ª1,13ª2,13ª3,14,14áâà2,14,14,15,16
7700000000018510010
16áâà1,16áâà2,17,18,19,19áâà1,19áâà1
7700000000018510011
20,22
7700000000018510012
1,3,5,5áâà2,6,6áâà1,8ª1,8ª1áâà3,8ª2
7700000000018520001
8ª3,10,10,11ª1,11ª1áâà2,11ª2,11ª2áâà1
7700000000018520002
11ª3,12,12,13áâà1,13áâà2,13áâà3
7700000000018520003
13áâà4,13ª1,13ª2,13ª2áâà1,14,14áâà2
7700000000018520004
14áâà3,15ª1,15ª1áâà1,15ª2,15ª3
7700000000018520005
2,3,3áâà1
7700000000018530001
1,1áâà2
7700000000018540001
ª4,ª8,ª10,ª12
7700000000018540002
2,2
7700000000018540003
ª6,2ª1,2ª1áâà1,2,2,2áâà1,2áâà2
7700000000018540004
2áâà3,2áâà4,2áâà5,2áâà6,2áâà7
7700000000018540005
2áâà8,2áâà9
7700000000018540006
2,4,4ª1,4,6,6ª1,6ª2,8ª1,8ª2,10,10ª1
7700000000018540007
10ª1áâà2,10ª2,12,12ª2,14áâà2,14ª1,14_
7700000000018540008
ª1,ª7,ª9,ª11,1áâà1,1,1áâà,1áâà
7700000000018540009
1ª1,1ª1áâà1,1ª1áâà2,1ª1áâà3
7700000000018540010
1ª1áâà4,1ª1áâà5,1ª2,1ª2áâà1
7700000000018540012
1ª2áâà1,1ª3,1ª3áâà1,1ª4,1ª5,1ª6
7700000000018540014
ª5
7700000000018540011
3,3áâà2,5,5áâà2,5,7,9,11
7700000000018540015
ª15,ª16,ª17,ª18,ª19,ª20,ª21,ª22,ª23
7700000000018540013
ª24,ª25,ª26
7700000000018540016
16ª1,16,16,18ª1,18ª2,20,20ª1,22
7700000000018540017
13ª2,15ª1,15ª2,15ª3,15ª4,17
7700000000018540018
1,3,3áâà2,4,6,8,9,10,10áâà1,11,12,14
7700000000018550001
16,16áâà1,16ª2
7700000000018550002
81,81áâà2,81áâà3,81,81áâà1,81áâà2
7700000000018560001
81áâà3,81áâà4,81áâà5,81áâà6
7700000000018560002
81áâà7,81áâà8,81áâà9,81áâà15
7700000000018560003
83áâà2,85,85áâà2,87,89,91ª1,91ª1áâà1
7700000000018560004
91ª2,91ª2áâà3,91ª3,93,93áâà3,93áâà4
7700000000018560005
95áâà1,95áâà2,95áâà3,95áâà4,95,97
7700000000018560006
97áâà1,97áâà2,99,101áâà1,101áâà2,101
7700000000018560007
101áâà2,101,101áâà3,101áâà5
7700000000018560008
101áâà1,101áâà2,101áâà3,101áâà6
7700000000018560009
101áâà7,101,101,101áâà1,101áâà2
7700000000018560010
101áâà3,103,103,105,105áâà1,105áâà2
7700000000018560011
105áâà3,105áâà4,105áâà6,105áâà7
7700000000018560012
7700000000018560013
105áâà13,105áâà14,105áâà16,105,105áâà1
7700000000018560014
7áâà2,7áâà3,7ª2,8,8ª1,9áâà1,9áâà2
7700000000018560015
1,1áâà4,3áâà3,3ª1,4áâà1,4áâà2,4áâà3
7700000000018560017
5áâà2,5áâà2,5áâà4,5ª1,6,6ª1,6ª2,7áâà1
7700000000018560018
9áâà3,10áâà1,10áâà2,10ª2,11,12áâà1
7700000000018560019
12áâà2,12áâà3,12áâà6,12áâà8,12áâà9
7700000000018560020
12ª3,13áâà1,14áâà1,14áâà2,14áâà6
7700000000018560022
14áâà10,15,15áâà2,15áâà3,16áâà1,16áâà2
7700000000018560023
16áâà4,17,18,19áâà1,19áâà2,19áâà3,20ª1
7700000000018560024
20ª2,22,22,24áâà1,24ª1,26,26áâà1
7700000000018560025
26áâà2,26áâà4,26áâà5,26áâà6,26áâà7
7700000000018560026
26áâà8,26áâà10,26áâà15,26áâà24,26áâà34
7700000000018560027
28,30áâà1,30áâà2,36áâà1,36áâà2,36áâà4
7700000000018560028
38,38áâà1,40,40áâà2,42
7700000000018560029
21áâà1,21áâà2,25áâà1,25áâà2,27,29,31
7700000000018560030
33ª1,39áâà1,39áâà2,39,41áâà1,41áâà2
7700000000018560031
43,44,45,46,46,47áâà1,47áâà2,48áâà2
7700000000018560032
48áâà3,48áâà4,48áâà5,48áâà6,49,49áâà4
7700000000018560033
49,50,51áâà1,52áâà1,52áâà2,52áâà3
7700000000018560034
52áâà4,52áâà5,52áâà6,52áâà7,53áâà1
7700000000018560035
53áâà2,54,54áâà9,55áâà1,56áâà1,56áâà2
7700000000018560036
56áâà3,56áâà4,57áâà1,58,61,61ª1,62áâà1
7700000000018560037
68,68áâà1,68áâà2,68áâà3,68áâà6,69áâà1
7700000000018560038
69áâà2,69áâà3,69áâà4,69áâà5,70,70áâà4
7700000000018560039
70,71áâà1,71áâà3,71áâà5,71áâà10
7700000000018560040
71áâà12,72,73,73áâà2,74áâà1,74áâà1
7700000000018560041
74áâà3,74áâà5,74áâà8,75áâà1,76,76áâà2
7700000000018560042
77ª1,77ª2,78,78áâà1,78,79,79áâà2,84
7700000000018560043
88áâà1,88áâà2,88áâà4,88áâà5,92áâà1
7700000000018560044
92áâà2,92áâà5,92áâà6,92áâà7
7700000000018560045
119áâà523,119áâà531,119áâà531
7700000000018560046
129223
119áâà348,119áâà349,119áâà350
7700000000018560047
94,94áâà1,94áâà2,94áâà3,96áâà1,96áâà2
7700000000018560048
96áâà3,96áâà4,96áâà5,96áâà6,96áâà7
7700000000018560049
96áâà8,96áâà9,96áâà10,96áâà11,96áâà12
7700000000018560050
96áâà13,96áâà14,96áâà15,96áâà16
7700000000018560051
96áâà17,96áâà18,96áâà19
7700000000018560052
188,188,190,190áâà1,192,194,196
7700000000018560053
196áâà1,198,198áâà4,198ª2,200,200ª2
7700000000018560054
202,202,220áâà1,220áâà2,220áâà3
7700000000018560055
220áâà4,220áâà6,220áâà7,220áâà8
7700000000018560056
220áâà9,220áâà10,220áâà11,220áâà12
7700000000018560057
220áâà14,220áâà17,220áâà18
7700000000018560058
220áâà19,220áâà1,220áâà2
7700000000018560059
222áâà1,222áâà2,222áâà3,222áâà4
7700000000018560060
222áâà5,222áâà6,222áâà7,222áâà8
7700000000018560061
222áâà9,222áâà10,222áâà11,222áâà12
7700000000018560062
222áâà13,222áâà14,222áâà15,222áâà16
7700000000018560063
222áâà17,222áâà18,222áâà19,222áâà20
7700000000018560064
222áâà21,222áâà22,222áâà23,222áâà24
7700000000018560065
222áâà25,222áâà26,222áâà27,222áâà28
7700000000018560066
222áâà29,222áâà30,222áâà31,222áâà32
7700000000018560067
222áâà33,222áâà34,222áâà35,222áâà36
7700000000018560068
222áâà37,222áâà38,222áâà39,222áâà40
7700000000018560069
222áâà41,222áâà42,222áâà43,224,224áâà2
7700000000018560070
224áâà3,224áâà4,224ª2,224ª3
7700000000018560071
118,118áâà1,118,120,120ª1,120,122
7700000000018560072
119áâà351,119áâà352,119áâà353
7700000000018560073
122áâà1,122áâà2,122ª1,122ª1áâà1
7700000000018560074
122ª1áâà2,122ª1áâà3,122ª1áâà4,122
7700000000018560075
124áâà1,124ª1,124ª2,124ª3,124ª4,124ª5
7700000000018560076
124ª6,124ª7,124ª8,124ª9,124ª10,124ª11
7700000000018560077
124ª12,124ª13,124ª14,124ª15,124ª16
7700000000018560078
119áâà354,119áâà355,119áâà356
7700000000018560079
119áâà50,119áâà54,119áâà61,119áâà92
7700000000018560080
119áâà232,119áâà251,119áâà426
7700000000018560081
119áâà632,119áâà633,119áâà634,121,123
7700000000018560082
167
7700000000018560083
161,163,163ª1,163ª2,165,165áâà1
7700000000018560084
165áâà2,167,169,169ª1,171,171áâà1,173
7700000000018560085
175,177,177áâà1,177áâà6,179,179áâà3
7700000000018560086
179,181,183,185ª1,185ª2,191áâà1,205
7700000000018560087
207áâà1,207áâà2,207áâà3,207áâà4
7700000000018560088
207áâà5,207áâà6,207áâà7,207áâà8
7700000000018560089
207áâà9,207áâà10,207áâà11,207ª1
7700000000018560090
207áâà1,207áâà2,207áâà3,207áâà4
7700000000018560091
123ª2
7700000000018560092
209,209áâà1,209áâà2,209áâà3,209áâà4
7700000000018560093
209áâà5,209áâà6,209áâà7,209áâà8
7700000000018560094
119áâà357,119áâà417,119áâà418
7700000000018560095
207áâà5,207áâà1
7700000000018560096
125áâà10,125áâà11,125áâà12,125áâà13
7700000000018560098
125áâà14,125áâà15,125áâà16,125áâà17
7700000000018560099
129,131,131ª1,131ª2,133,135,135áâà2,135
7700000000018560100
119áâà221,119áâà229,119áâà230
7700000000018560101
125
7700000000018560016
125,125áâà1,125áâà2,125áâà3,125áâà4
7700000000018560102
125áâà5,125áâà6,125áâà7,125áâà8
7700000000018560103
117áâà10,117áâà14,117,119áâà1,119áâà2
7700000000018560104
119áâà4,119áâà5,119áâà6,119áâà7
7700000000018560105
119áâà8,119áâà9,119áâà10,119áâà11
7700000000018560106
184áâà2,184áâà3,184ª1,184ª1áâà1,184ª2
7700000000018560108
184ª2áâà1,184,186ª1,186ª2,186ª2áâà1
7700000000018560109
186áâà1,186áâà2,186áâà3,186áâà4
7700000000018560110
186áâà5,186áâà6,186áâà7,186áâà8
7700000000018560111
186áâà9,186áâà10,186áâà11,186áâà12
7700000000018560112
186áâà13,186áâà16,186áâà17
7700000000018560113
186áâà18,186áâà19,186áâà20
7700000000018560114
186áâà21,186,186
7700000000018560115
226
7700000000018560116
áâà118
7700000000018560021
áâà115,111,115áâà1,115,117áâà1
7700000000018560117
117áâà2,117áâà4,117áâà5,117áâà6
7700000000018560118
117áâà6,117áâà7,117áâà8,117áâà9
7700000000018560119
119áâà17,119áâà18,119áâà19,119áâà20
7700000000018560120
119áâà21,119áâà22,119áâà23,119áâà24
7700000000018560121
119áâà25,119áâà26,119áâà27,119áâà28
7700000000018560122
119áâà29,119áâà30,119áâà31,119áâà33
7700000000018560123
119áâà34,119áâà35,119áâà36,119áâà37
7700000000018560124
119áâà38,119áâà38,119áâà41,119áâà42
7700000000018560125
119áâà44,119áâà45,119áâà46,119áâà49
7700000000018560126
119áâà51,119áâà53,119áâà55,119áâà56
7700000000018560127
119áâà57,119áâà58,119áâà59,119áâà60
7700000000018560128
119áâà62,119áâà63,119áâà64,119áâà66
7700000000018560129
119áâà67,119áâà68,119áâà69,119áâà69
7700000000018560130
119áâà69,119áâà70,119áâà71,119áâà79
7700000000018560131
119áâà80,119áâà82,119áâà88,119áâà89
7700000000018560132
119áâà90,119áâà91,119áâà95,119áâà97
7700000000018560133
119áâà98,119áâà101,119áâà102,119áâà104
7700000000018560134
119áâà284,119áâà288,119áâà289
7700000000018560135
119áâà290,119áâà295,119áâà298
7700000000018560136
119áâà310,119áâà311,119áâà312
7700000000018560137
119áâà317,119áâà319,119áâà322
7700000000018560138
119áâà105,119áâà129,119áâà130
7700000000018560139
119áâà131,119áâà133,119áâà134
7700000000018560140
119áâà136,119áâà137,119áâà139
7700000000018560141
119áâà140,119áâà141,119áâà142
7700000000018560142
119áâà149,119áâà153,119áâà154
7700000000018560143
119áâà163,119áâà164,119áâà165
7700000000018560144
119áâà166,119áâà167,119áâà169
7700000000018560145
119áâà170,119áâà171,119áâà172
7700000000018560146
119áâà173,119áâà174,119áâà174
7700000000018560147
119áâà178,119áâà179,119áâà186
7700000000018560148
119áâà191,119áâà194,119áâà195
7700000000018560149
119áâà206,119áâà219,119áâà220
7700000000018560150
119áâà222,119áâà223,119áâà227
7700000000018560151
119áâà228,119áâà231,119áâà233
7700000000018560152
119áâà244,119áâà245,119áâà246
7700000000018560153
119áâà259,119áâà270,119áâà275
7700000000018560154
119áâà323,119áâà325,119áâà326
7700000000018560155
119áâà327,119áâà328,119áâà329
7700000000018560156
119áâà330,119áâà331,119áâà333
7700000000018560157
119áâà334,119áâà335,119áâà336
7700000000018560158
119áâà337,119áâà339,119áâà341
7700000000018560159
119áâà342,119áâà343,119áâà344
7700000000018560160
119áâà345,119áâà346,119áâà347
7700000000018560161
119áâà419,119áâà420,119áâà421
7700000000018560162
119áâà422,119áâà423,119áâà440
7700000000018560163
119áâà441,119áâà441,119áâà441
7700000000018560164
119áâà442,119áâà452,119áâà455
7700000000018560165
119áâà457,119áâà467,119áâà469
7700000000018560166
119áâà473,119áâà475,119áâà478
7700000000018560167
119áâà481,119áâà486,119áâà491
7700000000018560168
119áâà491,119áâà493,119áâà494
7700000000018560169
119áâà495,119áâà498,119áâà499
7700000000018560170
119áâà500,119áâà501,119áâà502
7700000000018560171
119áâà503,119áâà504,119áâà506
7700000000018560172
119áâà507,119áâà508,119áâà510
7700000000018560173
119áâà511,119áâà512,119áâà513
7700000000018560174
119áâà514,119áâà516,119áâà517
7700000000018560175
119áâà518,119áâà519,119áâà520
7700000000018560176
119áâà521,119áâà522,119áâà524
7700000000018560177
119áâà525,119áâà526,119áâà527
7700000000018560178
119áâà528,119áâà528,119áâà529
7700000000018560179
119áâà530,119áâà532,119áâà533
7700000000018560180
119áâà534,119áâà535,119áâà536
7700000000018560181
119áâà538,119áâà539,119áâà541
7700000000018560182
119áâà544,119áâà545,119áâà546
7700000000018560183
119áâà547,119áâà548,119áâà549
7700000000018560184
119áâà550,119áâà551,119áâà553
7700000000018560185
119áâà556,119áâà557,119áâà558
7700000000018560186
119áâà559,119áâà561,119áâà562
7700000000018560187
119áâà565,119áâà566,119áâà567
7700000000018560188
119áâà569,119áâà571,119áâà571
7700000000018560189
119áâà574,119áâà575,119áâà577
7700000000018560190
119áâà578,119áâà579,119áâà580
7700000000018560191
119áâà581,119áâà582,119áâà583
7700000000018560192
119áâà584,119áâà585,119áâà586
7700000000018560193
119áâà587,119áâà588,119áâà589
7700000000018560194
119áâà590,119áâà591,119áâà592
7700000000018560195
119áâà593,119áâà596,119áâà597
7700000000018560196
119áâà598,119áâà599,119áâà600
7700000000018560197
119áâà601,119áâà602,119áâà603
7700000000018560198
119áâà604,119áâà609,119áâà612
7700000000018560199
119áâà615,119áâà616,119áâà619
7700000000018560200
119áâà620,119áâà621,119áâà625
7700000000018560201
119áâà626,119áâà627,119áâà628
7700000000018560202
119áâà265,119áâà266,119áâà297
7700000000018560203
119áâà304,119áâà304,119áâà305
7700000000018560204
119áâà306,119áâà306,119áâà307
7700000000018560205
119áâà324,119áâà338,119áâà424
7700000000018560209
182áâà2
7700000000018560211
128,128áâà1,128áâà2,130,130áâà1,132
7700000000018560212
142,142áâà2,146,146áâà3,150,150áâà1
7700000000018560213
176,180,180ª2,180,182,182ª2,182ª3
7700000000018560214
182ª3áâà4,182,182
7700000000018560215
109,109áâà1,111,119áâà16,119áâà39
7700000000018560216
119áâà40,119áâà43,119áâà47,119áâà48
7700000000018560217
98áâà1,98áâà2,98áâà1,98áâà2,102ª
7700000000018560218
102áâà1,102áâà4,102áâà5,102áâà6
7700000000018560219
102áâà7,102áâà8,102áâà10,102áâà12
7700000000018560220
102áâà13,102áâà14,102áâà15,102áâà16
7700000000018560221
102áâà17,102áâà20,102áâà21,102áâà22
7700000000018560222
7700000000018560225
98áâà1,98/13áâà1,98áâà1,98áâà3
7700000000018560226
98áâà4,98áâà5,98áâà6,98áâà7
7700000000018560227
98áâà8,98áâà9,98áâà10,98áâà11
7700000000018560228
98áâà12,98áâà13,98áâà14,98áâà15
7700000000018560229
102áâà35,102áâà37,102áâà38,102ª1,102ª2
7700000000018560230
102ª36,102,104,104áâà2,104áâà3,106
7700000000018560231
108,108,110áâà1,110/2,112,112áâà1
7700000000018560232
112áâà2,112áâà3,112,112,114,114
7700000000018560233
114,114áâà2,116,116áâà1,116,116
7700000000018560234
7700000000018570001
2áâà7,2áâà8,2áâà8,2áâà8,2áâà9,2áâà10
7700000000018570002
7700000000018570003
7700000000018570004
7700000000018570005
2áâà27,2áâà28,2áâà28,2áâà29,2áâà30
7700000000018570006
7700000000018570007
2áâà36,2áâà37,2áâà38,2áâà39,2áâà40
7700000000018570008
2áâà41,2áâà42,2áâà43,2áâà44,2áâà45
7700000000018570009
7700000000018570010
2áâà51,2áâà52,2áâà53,2áâà54,2áâà55
7700000000018570011
2áâà56,2áâà57,2áâà58,2áâà59,2áâà60
7700000000018570012
2áâà61,2áâà62,2áâà63,2áâà64,2áâà65
7700000000018570013
2áâà66,2áâà67,2áâà68,2áâà69,2áâà70
7700000000018570014
2áâà71,2áâà72,2áâà73,2áâà74,2áâà75
7700000000018570015
2áâà76,2áâà77,2áâà78,2áâà79,2áâà80
7700000000018570016
2áâà81,2áâà82,2áâà83,2áâà84,2áâà85
7700000000018570017
2áâà86,2áâà87,2áâà88,2áâà89,2áâà90
7700000000018570018
2áâà91,2áâà92,2áâà93,2áâà94,2áâà95
7700000000018570019
2áâà96,2áâà97,2áâà98,2áâà99,2áâà100
7700000000018570020
2áâà101,2áâà102,2áâà103,2áâà104
7700000000018570021
2áâà105,2áâà106,2áâà107,2áâà108
7700000000018570022
2áâà109,2áâà110,2áâà111,2áâà112
7700000000018570023
2áâà113,2áâà114,2áâà115,2áâà116
7700000000018570024
2áâà117,2áâà118,5/7,9,11áâà3,19,21,23
7700000000018570025
7700000000018570026
1,1,2,2,3,4,4,5,6,7,7,8,8,9
7700000000018580001
10áâà1,10áâà2,10ª1,11,12,13
7700000000018580002
1,1áâà2,1,2,3,5,7,9,11,13,15
7700000000018590001
1,2,3,4,5,7,9
7700000000018600001
2,3,4,4,5,6,6,7,9,11,11,13,15,17
7700000000018610001
10,12,18,24,24áâà2,26,28,32,32áâà2
7700000000018620001
32áâà4,32áâà5,32áâà6,32áâà10,32áâà11
7700000000018620002
32áâà12,32áâà21,32áâà22,32áâà23
7700000000018620003
34/2áâà4,34/2áâà5,34/2áâà6,34/2áâà7
7700000000018620004
34/2ª4,34/2ª5,34/2ª6,34/2ª7,38,40,44
7700000000018620005
44,46,46áâà1,46áâà2,46áâà3,46áâà4
7700000000018620006
46áâà5,46áâà6,46áâà8,46áâà9,46áâà10
7700000000018620007
46áâà11,46áâà12,46áâà13,46áâà14
7700000000018620008
46áâà15,46áâà16,46áâà18,46áâà19
7700000000018620009
46áâà20,46áâà21,46áâà22,46áâà23
7700000000018620010
46áâà24,46áâà25,46áâà26,46áâà27
7700000000018620011
46áâà28,46áâà30,46áâà31,46áâà32,46áâà34
7700000000018620012
9,9/28,9,11,11áâà2,11áâà3,11áâà4,13
7700000000018620014
13áâà24,25,27áâà1,27áâà1,27áâà1
7700000000018620015
27áâà1,27áâà1,27áâà1,27áâà2,27áâà3
7700000000018620016
27áâà4,27áâà5,27áâà10,27áâà12,27áâà14
7700000000018620017
27áâà15,27áâà16,33,33áâà1,33áâà3
7700000000018620018
7700000000018620019
33áâà9,33áâà10,33áâà11,33áâà14,33áâà16
7700000000018620020
33áâà17,33áâà18,33áâà19,33áâà20
7700000000018620021
33áâà22,33áâà23,33áâà26,33áâà27
7700000000018620022
33áâà28,33áâà29
7700000000018620023
3,4,5,5áâà1,5ª2,8ª1,8ª2,8ª2áâà1,8ª3,9
7700000000018630001
16ª1,16ª2
7700000000018630002
10,10áâà1,10áâà2,10ª1,10ª1áâà1
7700000000018640001
125464
15,15áâà1,17,17ª1,17ª2,17ª3,17ª4,19
7700000000018640002
125222
19ª1,21,21áâà1,21ª1,23,25,25ª1
7700000000018640003
25ª1áâà1,25ª2,25ª3,25ª4,27,27áâà1,27ª1
7700000000018640004
27ª2
7700000000018640005
53,53ª1,55,55áâà1,55ª1,57,57ª1
7700000000018640006
31,31áâà1,31ª1,33,33ª1,33ª1áâà1,33ª2
7700000000018640007
125368
35,37,37áâà1,39,41,43,45ª1,45ª2,45ª3
7700000000018640008
47,47ª1,47ª2,49,51
7700000000018640009
18,20,22áâà1,24áâà1,26,26áâà1,26áâà2
7700000000018640010
125430
26áâà3,28ª1,30áâà1,30áâà2,30áâà3
7700000000018640011
30áâà4,30áâà5,30áâà6,30áâà7,30áâà8
7700000000018640012
30áâà9,30áâà11,30áâà12,30áâà13,30áâà14
7700000000018640013
30áâà15,30áâà16,30áâà18,30áâà19
7700000000018640014
30áâà23,32,32áâà2,34,34áâà2,34ª1
7700000000018640015
34ª1áâà1,36,36áâà1,36ª1,36ª2,38,38áâà1
7700000000018640016
38ª1,38ª1áâà1,40,40ª1,40ª2,40ª2áâà2
7700000000018640017
40ª2áâà3,40ª3,42,44,44ª1,44ª2,46,46ª1
7700000000018640018
46ª2,48,48áâà1,48áâà2,48áâà3,48ª1,48ª2
7700000000018640019
50,50ª1,52,52ª1,52ª2,52ª3,56
7700000000018640020
áâà1,2,3,3ª1,4,5,5áâà1,7ª1áâà1,7ª1áâà2
7700000000018660001
1,2,3,4,5,6,7,8ª2,9,9áâà2,9áâà3,9áâà5
7700000000018700001
9áâà9,9áâà11,9áâà12,9,10,12ª1
7700000000018700002
17/4
7700000000018710001
7700000000018720001
1áâà8,1áâà11,3ª1,4ª1,5,6,6ª1,7ª1,7ª2,8
7700000000018720002
8,10ª1,10ª1áâà1,10ª2,10ª3,10ª4,10ª5
7700000000018720003
2,2áâà2,2ª1,2ª1áâà2,6,6áâà2,6áâà3
7700000000018730001
6áâà4,6áâà6,6áâà7
7700000000018730002
16,16áâà3,18,18áâà5
7700000000018750001
3,4,4áâà2,5,6,7,7áâà1,7áâà2,7áâà3
7700000000018760001
8ª1,8ª2,9
7700000000018760002
13/25,14ª1,14ª2,15,15ª1,15ª2,15ª3,15ª4
7700000000018760003
15,16,16ª1,16ª1áâà1,17,17áâà1,19,20ª1
7700000000018760004
20ª2,20ª3,20ª3áâà2,21,22,22áâà2,24
7700000000018760005
1,2,3áâà1,3áâà2,4,5_6,7,8,9,10,11,12
7700000000018790001
13,14,15,16,17,18,19,20,21áâà1,21áâà2
7700000000018790002
21áâà3,22,23,23
7700000000018790003
1,3,3áâà1,3áâà2,5,5áâà1,5áâà2,5ª1
7700000000018800001
5ª1áâà1,5ª2,5ª3,5ª3áâà1,7,7áâà1,7áâà2
7700000000018800003
7ª1,7ª1áâà1,7ª1áâà2,8áâà1,8áâà2,8ª1
7700000000018800005
8ª2,8ª2áâà1,8ª2áâà2,8/29,9,9ª1,9ª2,9ª3
7700000000018800006
9ª4,9ª4áâà1,9_,9,9,9,10,10áâà2
7700000000018800007
10ª1,10ª1áâà1,11ª1,11ª1áâà1,11ª1áâà2
7700000000018800008
11ª2,11ª3,11ª3áâà1,11ª4,11ª4áâà1,12ª1
7700000000018800009
12ª2,13,13áâà1,13áâà2,13áâà3,13áâà4
7700000000018800010
13ª1,13ª2,13ª3,15,15áâà1,15ª1,15ª2
7700000000018800011
15ª3,15,16,16áâà1,16áâà2,17,17ª1,17ª2
7700000000018800012
17ª4,17,18ª2áâà3,19áâà1,19ª1,19ª2
7700000000018800013
19ª3,19ª4,19ª5,19,20,21,21ª1,21ª2
7700000000018800014
21ª3,21ª4,21ª4áâà1,21ª5,21ª5áâà1
7700000000018800015
21ª5áâà2,21,21,22ª1,22ª2,24,26ª1áâà1
7700000000018800016
28,28áâà1,30,30áâà10,34,34áâà1
7700000000018800017
34áâà2,34áâà3,36,36,38,38áâà1,38áâà2
7700000000018800018
40,42,44ª1,44ª2,44,44,46,46áâà1,48
7700000000018800019
50,50áâà1,52,54ª1,54ª1áâà1,54ª1áâà2
7700000000018800020
54ª2,54ª3,54ª3áâà1,54ª4,54ª5,54ª6,54
7700000000018800021
56,56áâà2,56áâà3,56áâà4,58,58áâà1,58áâà2
7700000000018800022
2,4,4áâà1,6áâà1,6áâà2,6áâà3,6áâà4
7700000000018800025
7700000000018800026
6áâà11,6áâà12,6áâà13,6áâà14,6áâà15
7700000000018800027
6áâà16,6áâà17,6áâà18,6ª1,6ª1áâà1,6ª2
7700000000018800028
6ª2áâà1,6ª3,6ª3áâà1,6ª4
7700000000018800029
7700000000018800004
70,70,70áâà1,74,74áâà2,74áâà3,74ª2
7700000000018800030
76_
7700000000018800031
23,23,23áâà1,23áâà2,23áâà3,25ª1
7700000000018800032
119607
25ª2,25ª3,25ª4,25ª5,25_,27áâà4,27ª1
7700000000018800033
27ª1áâà1,27ª2,27ª3,27ª3áâà1,27ª3áâà2
7700000000018800034
27ª4,27ª5,27áâà1,27áâà7,27áâà8
7700000000018800035
27áâà9,27áâà10,27áâà11,27áâà12
7700000000018800036
27áâà13,27áâà14,27áâà15,27áâà17
7700000000018800037
27áâà18,27áâà21,27áâà24,27áâà25
7700000000018800038
27áâà26,27áâà30,27áâà31,27áâà33
7700000000018800039
27áâà34,27áâà35,27áâà36,27áâà37
7700000000018800040
27áâà39,27,27áâà1,27áâà2,27áâà3
7700000000018800041
27áâà4,27áâà5,27áâà6,27áâà7
7700000000018800042
27áâà8,29,29áâà1,29ª1,29ª2,29ª3,29ª4
7700000000018800043
37áâà2,39,39áâà1,45,45áâà1,45,47,49
7700000000018800044
49ª,51,62áâà1,62áâà2,62áâà3
7700000000018800045
7700000000018800002
4,12,14,14áâà2,16,22,22áâà1,23,24áâà1
7700000000018810001
26,26áâà1,27,27áâà2,28,29,32,32áâà2
7700000000018810002
34ª1,34ª2,35,35áâà2,35áâà5,38,38áâà2
7700000000018810003
39,42,46,56,56áâà2,56áâà5,56áâà7
7700000000018810004
56áâà8,56áâà9,56áâà10,56áâà11,56áâà12
7700000000018810005
56áâà13,56áâà14,56áâà15,57,57áâà2
7700000000018810006
áâà2,áâà3,1,1áâà2,1áâà3,1áâà4,1áâà5
7700000000018820001
1áâà6,1áâà7,1áâà8,1áâà9,1áâà10,1áâà11
7700000000018820002
7700000000018820003
1áâà19,1áâà20,3,3ª1,3ª1áâà3,3ª2,4
7700000000018820004
4áâà3,5,5áâà1,5áâà4,5áâà5,5áâà7,5ª2
7700000000018820005
5ª3,6,6áâà2,6ª2,6ª2áâà2,6ª2áâà3,7ª1
7700000000018820006
7ª1áâà4,7ª2,7ª3,7ª3áâà3,7ª4,7ª4áâà1
7700000000018820007
7ª5,7ª6,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5
7700000000018820008
9,9ª2,9áâà1,9áâà2,9áâà3,9áâà4
7700000000018820009
9áâà5,9áâà6,9áâà7,9áâà8,9áâà9
7700000000018820010
9áâà10,9áâà18,9áâà19,9áâà23
7700000000018820011
9áâà25,10áâà2,10ª1,10ª1áâà1,10ª1áâà2
7700000000018820012
10ª1áâà6,10ª2,10ª2áâà1,10ª3,10ª3áâà1
7700000000018820013
10ª4,10ª4áâà3,11,12,12ª1áâà1,13,13ª1
7700000000018820014
13ª1áâà1,13ª1áâà2,13ª2,13ª3,14ª1,15,16
7700000000018820015
16ª1,16ª1áâà2,16ª1áâà3,16ª1áâà4
7700000000018820016
16ª1áâà5,16ª1áâà6,16ª1áâà7,16ª1áâà8
7700000000018820017
16ª1áâà9,16ª1áâà10,16ª1áâà11,16ª1áâà12
7700000000018820018
16ª1áâà13,17,18,19,21,21ª2,21ª2áâà2,23
7700000000018820019
23áâà2,25,25áâà1,25áâà2,27,29
7700000000018820020
1,3,3áâà2,7,9,11,11áâà2,11áâà3
7700000000018850001
4,6,8,8áâà2,8áâà3,8áâà4,8áâà5,8áâà6
7700000000018850002
7700000000018850003
8áâà14,8áâà17,8áâà18,8áâà19,8áâà20
7700000000018850004
8áâà21,8áâà22,8áâà23,8áâà24,8áâà27,8
7700000000018850005
10,10áâà21,10áâà22,10áâà23,10áâà24,12
7700000000018850006
7700000000018860001
45ª1,45ª2,45ª2áâà5,45ª2áâà6,45ª3,45ª4
7700000000018870001
30,32,34ª1,34ª2,34ª3,34_,36,38áâà4
7700000000018870002
38ª1,38ª1áâà2,38ª2,38ª3,38ª4,38ª4áâà5
7700000000018870003
38ª5,38ª5,38ª6,38ª7,39,39áâà1,39áâà2
7700000000018870004
39,39,40,41ª1,42,43,43áâà4,43/1áâà2
7700000000018870005
44,46,55,58
7700000000018870006
3/1,3/1áâà2,5,5
7700000000018870007
2,2,2,2,4ª1,4ª1áâà1,4ª1áâà2,4ª1áâà3
7700000000018870008
4ª2,4,4,4,6,6ª1,8,8áâà1,10,12
7700000000018870009
12áâà2,14áâà1,14áâà2,14áâà3,14áâà4
7700000000018870010
14áâà5,14áâà6,14áâà7,14áâà8,14áâà9
7700000000018870011
14áâà10,14áâà12,14áâà15
7700000000018870012
7áâà1,7áâà2,9,9áâà2,11,13,15,15,16,17
7700000000018870013
17áâà2,18áâà2,18ª1,18ª2,19,20ª1,20ª2
7700000000018870014
20ª2áâà2,21,21áâà2,21ª2,21ª3,22,22ª1
7700000000018870015
22ª2,22ª2áâà1,22ª2áâà2,23,23áâà2,24,25
7700000000018870016
25áâà2,25áâà3,25áâà4,25áâà5,25áâà6,26
7700000000018870017
27,28,28áâà3,28,29,29áâà2,29,31ª1
7700000000018870018
31ª1áâà4,31ª2,31ª3,31,33,37
7700000000018870019
48,48áâà5,50,54,54áâà1,165,165áâà1
7700000000018870021
165áâà2,165áâà2,165áâà3,165áâà4
7700000000018870022
165áâà5,165áâà6,165áâà7,165áâà8
7700000000018870023
165áâà9,165áâà10,165áâà11,165áâà12
7700000000018870024
165áâà13,165áâà15,165áâà23,165áâà24
7700000000018870025
165áâà32,165áâà33,165áâà34
7700000000018870026
2ª1,2ª1áâà2,2ª2,2ª2,2ª3,2ª3áâà1,2ª4
7700000000018880001
2,2,4,5,5áâà2,5áâà4,5áâà5,5áâà6
7700000000018880002
5áâà7,5áâà8,5áâà9,5áâà16,6,6ª2,8,8áâà2
7700000000018880003
7700000000018880004
1,3,5,7,9,11,15,17,17
7700000000018890001
3,3,4,4,5,6
7700000000018900001
12,12áâà1,12áâà2,12áâà3,12áâà4,12áâà5
7700000000018910001
15,15áâà1,15,18,18ª2,18ª2áâà5,19ª1
7700000000018910002
19ª2,19ª2áâà2,20áâà1,20áâà2,20áâà3
7700000000018910003
21ª1,22ª1,22ª2,22ª3,23ª1,24ª1,24ª2
7700000000018910004
24ª2áâà1,24ª3,24ª4,24ª5,25ª1,25ª2,26ª1
7700000000018910005
27ª1,27ª2,28ª1,29ª1,29ª2,30ª1,31ª1
7700000000018910006
31ª1áâà1,31ª2,32,33ª1,33ª2,34áâà3,34ª1
7700000000018910007
34ª2,35ª1,35ª2,36ª3,36ª4,36ª5,36ª6
7700000000018910008
37ª1,38áâà4,38ª1,39,40ª1,40ª1áâà1
7700000000018910009
40ª1áâà2,41,41/20áâà1,42,43,45,46ª1
7700000000018910010
46ª2,46ª3,47,47áâà4,47ª1,47ª3,48,49,50
7700000000018910011
51,52,52áâà2,52áâà3,52áâà4,52áâà5
7700000000018910012
52áâà6,52áâà7,52áâà8,52áâà9,52áâà10,53
7700000000018910013
54,54áâà2,54áâà3,54áâà4,54áâà5,54áâà6
7700000000018910014
54áâà7,54áâà8,54áâà10,54áâà11,54áâà12
7700000000018910015
54áâà13,54áâà14,54áâà15,54áâà16
7700000000018910016
54áâà17,54áâà19,54áâà22,54áâà23
7700000000018910017
54áâà24,54áâà25,54áâà26,54áâà27
7700000000018910018
54áâà43,55,57,57áâà2,57áâà3,57áâà4
7700000000018910019
7700000000018910020
57áâà10,57áâà11,57áâà12,57áâà13,58
7700000000018910021
58áâà2,58áâà3,58áâà4,58áâà5,58áâà6
7700000000018910022
58áâà7,58áâà8,58áâà9,58áâà13,58áâà16
7700000000018910023
58áâà18,59,59áâà2,59áâà3,59áâà4,59áâà5
7700000000018910024
60,60,61,61áâà2,61áâà3,61áâà4,61áâà5
7700000000018910025
61áâà7,61áâà8,61áâà9,61áâà10,61áâà11
7700000000018910026
61áâà12,61áâà13,61áâà16,61áâà17
7700000000018910027
61áâà18,61áâà19,61áâà20,61áâà22
7700000000018910028
61áâà26,61áâà27,61áâà28,61áâà29
7700000000018910029
61áâà30,61áâà31,61áâà32,61áâà33
7700000000018910030
61áâà34,61áâà35,61áâà37,61áâà39
7700000000018910031
61áâà43,61ª2,61ª2áâà1,61ª2áâà2
7700000000018910032
61ª2áâà3,61ª2áâà4,61ª2áâà5,61ª2áâà6
7700000000018910033
61ª2áâà8,61ª2áâà9,61ª2áâà13,61ª2áâà14
7700000000018910034
61ª2áâà15,61ª2áâà16,61ª2áâà17
7700000000018910035
61ª2áâà18,61ª2áâà20,61ª2áâà21
7700000000018910036
61ª2áâà24,61ª2áâà25,62ª2áâà1,62ª2áâà2
7700000000018910037
62ª2áâà3,63,63áâà1,63áâà2,63áâà3
7700000000018910038
63áâà4,63áâà5,63áâà6,63áâà7,63áâà8
7700000000018910039
63áâà9,63áâà12,63áâà13,63áâà14,65
7700000000018910040
65áâà6,65áâà7,65áâà8,65áâà9,65áâà10
7700000000018910041
65áâà11,65áâà12,65áâà13,65áâà15
7700000000018910042
65áâà16,65áâà17,65áâà26,65áâà27,66
7700000000018910043
7700000000018910044
1ª1,1ª2,2,2ª1,2ª1,2ª2,2ª3,3,4,4ª1
7700000000018910045
4ª1áâà2,5,5áâà3,5,6,7,7áâà2,7áâà3
7700000000018910046
7áâà4,7áâà12,8,8áâà3,8,9,9áâà2,10
7700000000018910047
7700000000018910048
7700000000018910049
7700000000018910050
7700000000018910051
10áâà20,11ª1,11ª1áâà3,11ª2,11ª2áâà3
7700000000018910052
7700000000018920001
14áâà6,14áâà7,14áâà8,14áâà9,14áâà1
7700000000018920002
14áâà2,14áâà3,14áâà4,14áâà7
7700000000018920003
14áâà8,14áâà9,14áâà14,14áâà16
7700000000018920004
14áâà19,15ª1,15ª2,15ª2áâà1,16áâà1
7700000000018920005
7700000000018920006
7700000000018920007
16áâà12,16áâà13,16áâà14,16áâà15,16
7700000000018920008
17ª1,17ª3áâà2,19áâà1,19ª1,19ª2
7700000000018920009
19ª2áâà1,21,21áâà2,21,23ª1,23ª2,25ª1
7700000000018920010
25ª2,25ª2áâà2,25ª3,27ª1,27ª2,27ª3
7700000000018920011
27ª3áâà1,29áâà1,29ª2,29ª2áâà1,29ª3
7700000000018920012
29ª4,31ª1,31ª2,31ª3,33ª1,33ª2,33ª2áâà1
7700000000018920013
2ª1,2ª2,2ª2áâà1,2ª4,2ª4áâà1,2ª4áâà2,2
7700000000018920014
127221
33ª2áâà2,33ª3
7700000000018920015
2,4,4áâà1,4ª1,4ª1áâà1,4,6,8áâà1,8ª2
7700000000018920016
1,1,1,3,3áâà1,3áâà2,5,5áâà1,5
7700000000018920017
6áâà1,6áâà2,6áâà3,6áâà4,6áâà5,6áâà6,9
7700000000018920018
9áâà1,9áâà2,9áâà3
7700000000018920019
1áâà2,1,1áâà1,1áâà5,1áâà9,2/2áâà1
7700000000018930001
2/2áâà2,2/2áâà3,3/18,3/18áâà2,3/18áâà3
7700000000018930002
3/18áâà12,3áâà1,6/16,8,9,10,11,11áâà4
7700000000018930003
11áâà6,12áâà1,13_15áâà1,13_15áâà2
7700000000018930004
13_15áâà4,14,16,16áâà2,16áâà7,16áâà8
7700000000018930005
18,18áâà1,21,21_23áâà2,21_23áâà11
7700000000018930006
21_23áâà12,25_27áâà1,25_27áâà3
7700000000018930007
25_27áâà4,25_27áâà6,29,29áâà1,29áâà2
7700000000018930008
29áâà3,29áâà4,31,31áâà3,33,35áâà1
7700000000018930009
41áâà1
7700000000018930010
1,1ª2,2,2áâà1,4,4áâà2,5,6,6áâà2,7
7700000000018940001
9áâà1,9áâà2,9áâà3,9áâà4,10/16áâà6,11
7700000000018940002
10,12áâà1,12áâà2,15/12,17,18,21
7700000000018950001
23áâà1,23áâà2,23/38áâà2,24/2áâà1
7700000000018950003
24/2áâà1,26_28,30/7áâà1,30/7áâà2
7700000000018950004
32áâà1,34áâà2,34áâà5,34áâà9,36áâà1
7700000000018950005
7700000000018950002
121205
2,4,6,7áâà1,7áâà2,7áâà3,7áâà4,8áâà1
7700000000018960001
7700000000018960002
3áâà1,5áâà1,8
7700000000018970001
2/12,6áâà2
7700000000018980001
4áâà1,4áâà2,7áâà2,9áâà1,9áâà4,10/1
7700000000018990001
11áâà1,15,16áâà1,17,17áâà2
7700000000018990002
1/6áâà1,1/6áâà3,7,9áâà1
7700000000019000001
3áâà1,4,5áâà2,5áâà3,6áâà1,7,7áâà2,8/10
7700000000019010001
8/10áâà2,11áâà1,11áâà3,11áâà4,11áâà6
7700000000019010002
11áâà7,11áâà8,12áâà1,13,14,14áâà2,16
7700000000019010003
5,8áâà1,8áâà2,10áâà8,10áâà13,10áâà15
7700000000019020001
7700000000019030001
2áâà1,2áâà2,7áâà1,7áâà2,7áâà3,7áâà4
7700000000019030002
9áâà12,9áâà62
7700000000019030003
1,1,1áâà5,2,2áâà1,3áâà1,3áâà2,5/7
7700000000019050001
6/8áâà1,7/10,8/23,9/25áâà1,10,10áâà3
7700000000019050002
11áâà1,11áâà2,11áâà3,11áâà4,11,12,13
7700000000019050003
13áâà2,13,14áâà1,14áâà2,15áâà1,15
7700000000019050004
15,15áâà2,15,16,16áâà1,16áâà16
7700000000019050005
17áâà1,18áâà1,18áâà9,19áâà1,20/21,21
7700000000019050006
23áâà1,23áâà2,24,25/23áâà1,25/23áâà11
7700000000019050007
26,27,27áâà1,27áâà2,27áâà3,27áâà4
7700000000019050008
7700000000019050009
7700000000019050010
27áâà14,27áâà15,27áâà16,27áâà17
7700000000019050011
27áâà18,27áâà19,27áâà20,27áâà21
7700000000019050012
27áâà22,27áâà23,27áâà24,27áâà25,28
7700000000019050013
29áâà1,29áâà3,29áâà4,30,30,31,31,32
7700000000019050014
33,34áâà1,34áâà3,34áâà6,34áâà11,34
7700000000019050015
7700000000019050016
36/7,37_39áâà1,37_39áâà2,37_39áâà3
7700000000019050017
37_39áâà4,38/10,40,41,43,45,45áâà2,47
7700000000019050018
49,51/12áâà1,51/12áâà2,53,55
7700000000019050019
57_57áâà1,57_57áâà2,59,59áâà1,59áâà2
7700000000019050020
áâà6,áâà8,áâà11,áâà12,áâà13,áâà14
7700000000019060001
áâà15,áâà16,áâà17,áâà18,áâà19,áâà20
7700000000019060002
áâà21,áâà23,áâà24,áâà26,áâà28,1,1áâà4
7700000000019060003
1áâà7,1áâà9,4,4áâà2,4áâà3,4áâà4,4áâà5
7700000000019060004
4áâà6,4áâà7,4áâà8,4áâà9,4áâà10,4áâà12
7700000000019060005
4áâà13
7700000000019060006
2áâà1,5áâà2,5_7,10áâà1,11_15
7700000000019080001
áâà2,40,40,42áâà1,42áâà2,42áâà3
7700000000019090001
42áâà4,49,51áâà1,51áâà2,74,76,78
7700000000019090002
78áâà1,78áâà2,80,80áâà1,80áâà2,80áâà3
7700000000019090003
1áâà,1áâà1,1áâà2,1áâà3,1áâà4,1áâà5
7700000000019090004
7700000000019090005
1áâà12,1áâà13,1áâà14,1áâà15,1áâà16
7700000000019090006
1áâà17,1áâà18,1áâà19,1áâà20,1áâà21
7700000000019090007
1áâà22,1áâà23,1áâà24,1áâà25,1áâà27
7700000000019090008
1áâà28,1áâà30,1áâà31,1áâà32,1áâà33
7700000000019090009
7700000000019090010
1áâà39,1áâà40,1áâà41,1áâà42,1áâà43
7700000000019090011
1áâà44,1áâà45,1áâà46,1áâà47,1áâà48
7700000000019090012
1áâà49,1áâà50,1áâà51,1áâà52,1áâà53
7700000000019090013
1áâà54,1áâà55,1áâà56,1áâà57,1áâà58
7700000000019090014
1áâà59,1áâà60,1áâà61,1áâà62,1áâà63
7700000000019090015
1áâà64,2,4,4,4áâà1,6,10,12,14
7700000000019090016
14áâà1,16,18,18,18áâà1,18áâà13,20/2
7700000000019090017
22,24,26,26áâà2,28,28ª1,28,30,32
7700000000019090018
32áâà1,34,36,38,38áâà1,38,44áâà1
7700000000019090019
44áâà2,44áâà3,44áâà4,44áâà5,44áâà6
7700000000019090020
44ª1,46,46áâà2,46áâà3,46áâà4,46áâà5
7700000000019090021
46áâà6,46,50áâà1,50áâà2,50áâà3,50áâà4
7700000000019090022
50ª1,50ª1áâà2
7700000000019090023
11ª1,11ª2,11ª3,11ª4,11ª4áâà1,13,13áâà1
7700000000019090024
13áâà2,15,15áâà1,15,17/25,17/25áâà1
7700000000019090025
17/25áâà2,17,17,19ª1,19ª2,21,23,25
7700000000019090026
25áâà1,25,27,27,29,29,29áâà1,31
7700000000019090027
31,33,33áâà2,35,35áâà2,37ª1,37ª2,39ª1
7700000000019090028
39ª1áâà2,39ª2,39ª3,41,41ª1,41ª1áâà1
7700000000019090029
41ª2,43/40
7700000000019090030
52,52áâà2,52áâà3,52áâà4,52áâà5,54áâà1
7700000000019090031
54áâà2,54áâà3,58áâà1,58áâà2,58áâà3
7700000000019090032
62,62áâà2,62áâà3,62áâà4,64,64áâà2
7700000000019090033
64áâà3,64áâà4,66,66áâà,66áâà1,66áâà2
7700000000019090034
70,70áâà1,70áâà2,70áâà3,70áâà4,70áâà5
7700000000019090035
72,72áâà2,72áâà3,72áâà4,72áâà5,72áâà6
7700000000019090036
72áâà7,72
7700000000019090037
1,3,3,4,5,5áâà3,10,10áâà1,10áâà2,12
7700000000019110001
14,18,21áâà3,21áâà4,21áâà5,24
7700000000019110002
6,8,8áâà3,8áâà5,21,21,22áâà1,22
7700000000019110003
1/14,3,4,5,7,9,11,12,15
7700000000019120001
9áâà1,9áâà2,9áâà4,9áâà7,9áâà9
7700000000019130001
7700000000019130002
6áâà2,6_8,8áâà1,8áâà2,10áâà1,10áâà2
7700000000019130003
10áâà3,10áâà8,12áâà1,14áâà1,14áâà2
7700000000019130004
9áâà10,9áâà24
7700000000019130005
9áâà3,13áâà1
7700000000019130006
11áâà3,11áâà4,11áâà5,11áâà6,11áâà7
7700000000019130007
7700000000019130008
11áâà13,11áâà55
7700000000019130009
15/1áâà1
7700000000019130010
7700000000019140001
1áâà7,1áâà11,1áâà15,1áâà16,11áâà1
7700000000019140002
7700000000019140003
11áâà7,11áâà8,11áâà9,11áâà10,11áâà11
7700000000019140004
11áâà12,11áâà13,11áâà13,11áâà14
7700000000019140005
11áâà19,11áâà20,11áâà1,12áâà1,12áâà2
7700000000019140006
1ª1,1ª2,2áâà1,2,2áâà1,2áâà2,2áâà3
7700000000019150001
2áâà5,2áâà6,2áâà7,2áâà8,2áâà1
7700000000019150002
3áâà1,3áâà2,4áâà1,4,4áâà1,4áâà2,5ª1
7700000000019150003
5ª2,7ª1,7ª2,9ª1,9ª2,11
7700000000019150004
1áâà1,2áâà1,3áâà1,4áâà1,5áâà1,6áâà1
7700000000019160001
16áâà2,17áâà1,18áâà1,19,20áâà1,21áâà1
7700000000019160002
7áâà1,9áâà1,10áâà1,11,12áâà1,12áâà2
7700000000019160004
13áâà1,14áâà1,15áâà1,15áâà2,16áâà1
7700000000019160005
42áâà1,43áâà1,44áâà1,45,47áâà1,49
7700000000019160006
22áâà1,23áâà1,24,25áâà1,27áâà1,28áâà1
7700000000019160007
29áâà1,30,30áâà1,31áâà1,32áâà1,33,34
7700000000019160008
35,37áâà1,38,39áâà1,40áâà1,41áâà1
7700000000019160009
7700000000019160003
1,3áâà1,5,7áâà1,9,9áâà1,11,11áâà1,13
7700000000019170001
13áâà1,15áâà1,17áâà1,19áâà1,21áâà1
7700000000019170002
5,5áâà1,7,7áâà1,7áâà2,7,7,7,9,11,13
7700000000019180001
13áâà2,13,13,13áâà1,15,15áâà1,15
7700000000019180002
15,17,17,17áâà1,17áâà2,19,19áâà2
7700000000019180003
19,19,21,21,21áâà1,21áâà2
7700000000019180004
3,3áâà2,4,4áâà1,4ª1,4,6,6áâà2,6,8
7700000000019180006
8áâà2,8áâà3,8,8,10,10áâà1,10áâà2
7700000000019180007
10,10áâà1,10,12,12áâà1,12,12
7700000000019180008
1,1áâà2,1áâà3,1áâà4,1áâà7,1áâà1
7700000000019190001
1áâà5,1áâà6,1áâà7,1áâà8,1áâà12
7700000000019190002
3áâà1,3áâà2,5áâà1,5áâà2,14,14áâà5
7700000000019190003
7700000000019190004
14áâà11,14áâà12,14áâà13,14áâà15,14ª1
7700000000019190005
14ª2,14ª3,14ª4,14ª14,16,16áâà1,16áâà2
7700000000019190006
18,20,20áâà2,22,22áâà2,22
7700000000019190007
4,6,8,8áâà1,10,12,12áâà1
7700000000019190008
1,1,1áâà1,1áâà2,1áâà3,1,3,3,4
7700000000019210001
5ª1,5ª2,5ª3,7,7,8,8áâà1,8,9,9áâà2,11
7700000000019210002
11áâà1,11áâà2,11,11,11áâà1,11,15
7700000000019210003
1,1áâà1,1ª1,1ª1áâà1,2,3,3ª1,3ª1áâà1
7700000000019220001
3/2,4,4ª1,5,5ª1,5ª1áâà1,6,6áâà1,6ª1,6
7700000000019220002
7,7ª1,7ª1áâà1,7ª2,7ª3,7ª3áâà1,8,8áâà1
7700000000019220003
8áâà2,8ª2,9,10,10áâà1,10ª1,10ª2,10ª3
7700000000019220004
10ª3áâà1,10,12,12áâà1,12áâà2,12ª1
7700000000019220005
12ª2,13,13ª1,14,14ª1,14ª1áâà1,18,18áâà1
7700000000019220006
2,3áâà1,4áâà1,14áâà1
7700000000019220007
3,5,7,8,9,10,11,12,13,15,16_14áâà1
7700000000019230001
16_14áâà2,18,18_20áâà1,18_20áâà2
7700000000019230002
20áâà2,22,22,24,26
7700000000019230003
1,1áâà1,3,3áâà1,12áâà1,15áâà1,16áâà1
7700000000019240001
7700000000019240002
7700000000019240003
7700000000019240004
1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6
7700000000019250001
7700000000019250002
7700000000019250003
7700000000019250004
7700000000019260001
3áâà9,3áâà10,3áâà11,3áâà13,3áâà14
7700000000019260002
3áâà15,3áâà16,5,5áâà1,8,10áâà1,10áâà2
7700000000019260003
10áâà2,10áâà3,10áâà4,10áâà5,10áâà7
7700000000019260004
7700000000019260005
10áâà13,10áâà14,10áâà15,12áâà1,14,14
7700000000019260006
7700000000019260007
7700000000019260008
16áâà11,16áâà14,16áâà15,16áâà16
7700000000019260009
16áâà17,16áâà18,16áâà19,16áâà20
7700000000019260010
16áâà21,16áâà21,16áâà22,16áâà23
7700000000019260011
7700000000019260012
16áâà34,16áâà35,16áâà37,16áâà40
7700000000019260013
16áâà28,16áâà29,16áâà30,16áâà32
7700000000019260014
16áâà43,16áâà44,16áâà45,16áâà47
7700000000019260015
16áâà51,16áâà52,16áâà53,16áâà54
7700000000019260016
ª1,ª2,2,4,6,8áâà1,8áâà2,10,12,14
7700000000019270001
7700000000019280001
13áâà7,13áâà8,13áâà8,13áâà11,13áâà13
7700000000019280002
44,44áâà1,44áâà2,44áâà10,44áâà12
7700000000019280003
44áâà13,44áâà14,46áâà6,46/2áâà1
7700000000019280004
46/2áâà3,46/2áâà5
7700000000019280005
17,19,21,23,23áâà3,23ª1,23ª1áâà2,23ª3
7700000000019280006
23ª6,23ª9,25,25ª1,27,27ª1,48,48/50,50
7700000000019280007
50áâà2,50áâà3,50ª3,52,54,56,58,58áâà2,60
7700000000019280008
62,66,74,74áâà3,74áâà7
7700000000019280009
7700000000019280010
7700000000019280011
1áâà1,3,12,16áâà1,18,18áâà2,22áâà1,24
7700000000019280012
28áâà1,28áâà3,28áâà5,40áâà1,40áâà2
7700000000019280013
40áâà3,40áâà4,40áâà5
7700000000019280014
2,4,6,8,10,12,14,16áâà1,16áâà2,16áâà5
7700000000019290001
18,20,22,24,26,26áâà2,28,28áâà2,30,32
7700000000019290002
34,34áâà2,34áâà4,34áâà5,34áâà6,34áâà7
7700000000019290003
34áâà9,34áâà10,34áâà11,34áâà12,34áâà13
7700000000019290004
34áâà14,34áâà15,38,40,40,42
7700000000019290005
1,2,2ª2,3,4,5,5áâà2,6,7,8,9,9áâà5
7700000000019300001
9áâà7,10,11,12,13,13áâà2,14,15,16
7700000000019300002
16áâà2,17,18,19,20,20áâà2,23,24,25,27
7700000000019300003
28_30áâà1,28_30áâà3,29,29áâà2,29áâà3
7700000000019300004
29áâà9,29áâà10,31,31áâà2,32,33,34,35
7700000000019300005
36,36áâà2,37,37áâà3,38,40,40áâà12,42
7700000000019300006
43,44,45,46,46áâà10,47,47áâà2,47áâà5
7700000000019300007
47áâà6,48,50áâà1,50áâà2,52,56_58áâà1
7700000000019300008
56_58áâà2,60,60áâà2,60áâà7,62,62áâà2
7700000000019300009
64,64áâà11,66,66áâà2,66áâà3,68,68áâà2
7700000000019300010
1,2_4áâà1,2_4áâà2,3,5,6,7,8,10,11,12
7700000000019310001
13,14,15,16,16áâà2,17,17áâà1,18,19,21
7700000000019310002
22,23,24,26,28,30,32,34/12
7700000000019310003
1,3,5,6,8,9,11,13,13áâà2,13áâà3,13áâà4
7700000000019320001
13áâà5,14,15,16,17,17áâà2,19,19áâà2,21
7700000000019320002
23áâà1,25,25áâà2,25áâà3,25áâà4,25áâà5
7700000000019320003
25áâà6,25áâà7,25áâà9,25áâà10,27
7700000000019320004
7700000000019330001
7700000000019330002
áâà14,áâà15,áâà16,áâà17,áâà18,áâà19
7700000000019330003
áâà20,áâà21,áâà22,áâà23,áâà24,áâà25
7700000000019330004
áâà26,áâà27,áâà28,áâà29,áâà30,áâà31
7700000000019330005
áâà32,áâà33,áâà34,áâà35,áâà36,áâà37
7700000000019330006
áâà38,áâà39,áâà40,áâà41,áâà42,áâà43
7700000000019330007
áâà44,áâà45,áâà46,áâà47,1,2,3,4,5
7700000000019330008
6_8áâà1,6_8áâà2,10,12,13,14,14áâà2,15
7700000000019330009
16,17,18,18áâà2,19,20,21,25_27áâà1
7700000000019330010
25_27áâà2,29,31_35áâà1,31_35áâà2,33,37
7700000000019330011
39,41_41áâà1,41_41áâà2,41_41áâà5
7700000000019330012
41_41áâà10,43,43áâà1,45_47áâà1
7700000000019330013
45_47áâà2,49,51,53,53áâà5,53áâà6
7700000000019330014
53áâà7,53áâà8,53áâà10,53áâà11,55áâà1
7700000000019330015
2áâà1,2áâà2,2áâà3,3áâà2,3áâà3,8/10,14
7700000000019370001
14,14áâà2,16,18,20
7700000000019370002
5,5áâà2,5áâà3,7,10,10áâà1
7700000000019380001
1,1áâà1,1áâà2,1ª1,2,3,3áâà1,4,4áâà1
7700000000019400001
4áâà2,5,5áâà1,5ª1,5ª1áâà1,6,6áâà1
7700000000019400002
8áâà1,9,9áâà1,9ª1áâà1,9ª1áâà2,11,11ª1
7700000000019400003
11ª2,11ª3,13,15,17,17,17,19,19ª1
7700000000019400004
3áâà1,5áâà1,5áâà2,7áâà1,7ª1,13,15áâà1
7700000000019410001
15áâà2,15ª1,17/22
7700000000019410002
54,54áâà2,54áâà3,54áâà4,56,56ª2
7700000000019430001
56ª2áâà2,56,56áâà2,58ª2,58ª2áâà2
7700000000019430002
58ª3,60ª1,60ª2,60ª3,60ª4,60ª4áâà1,62
7700000000019430003
62áâà2,62áâà3,62áâà4,62ª2,62ª2áâà2
7700000000019430004
62ª2áâà3,64,64ª1,64ª2,66ª2,66ª2áâà2,70
7700000000019430005
7700000000019430006
42ª2,42ª3,42ª3áâà3,44ª1,44ª1áâà2,44ª3
7700000000019430007
4ª1áâà5,4ª1áâà6,4ª1áâà8,4ª1áâà9
7700000000019430008
32ª1,34,34áâà2,40/1,40/1áâà2,40/1áâà3
7700000000019430009
40/1áâà4,40/1áâà5,40/1ª1,40,40áâà2
7700000000019430010
44ª3áâà2,46,46ª1,46ª2,46ª3,46ª3áâà2
7700000000019430011
46ª3áâà3,48/2,48/2áâà2,48/2áâà3,48
7700000000019430012
4,4ª1,4ª1áâà1,4ª1áâà2,4ª1áâà3,4ª1áâà4
7700000000019430013
6ª1,6ª1áâà2,6ª1áâà3,6ª1áâà4,6ª1áâà5,10
7700000000019430014
10ª2,10,10áâà2,10áâà3,10áâà4
7700000000019430015
10áâà5,10áâà6,10áâà7,10áâà9,12ª1
7700000000019430016
12ª2,12ª2áâà3,12ª3,12ª3áâà2,12ª4
7700000000019430017
12ª4áâà2,12ª5,14ª2,14ª3,14ª4,14ª5
7700000000019430018
14ª5áâà3,14ª5áâà7,14ª6,16,16áâà2,16ª2
7700000000019430019
16ª3,16ª3áâà2,16,16áâà2,18,20,20ª2
7700000000019430020
7700000000019440001
7700000000019450001
117186
7700000000019450002
1áâà13,1áâà14,1áâà15,1áâà16
7700000000019450003
2ª1,2ª1áâà1,2ª2,2ª2áâà2,2áâà1,2áâà2
7700000000019450004
2áâà6,2áâà7,2ª7,3áâà1,3áâà2,3áâà3
7700000000019450005
7700000000019450006
3áâà13,3áâà14,4,4,5áâà4,5áâà11,5ª1
7700000000019450007
5ª2,5ª3,5ª4,6ª1,7ª1,7ª2,7ª2áâà1,7ª3
7700000000019450008
7ª4,7ª5,7,7áâà1,9ª1,9ª1áâà1,9ª2,10ª2
7700000000019450009
11ª1,11ª1áâà1,11ª2,11ª2áâà1,12áâà1
7700000000019450010
12ª1,12ª2,12ª2áâà1,12ª3,12ª3áâà1,12ª4
7700000000019450011
13ª2,13ª3,13ª4,13ª4,14ª1,14ª1áâà1
7700000000019450012
14ª2,15ª3,15ª3áâà1,15ª4,15ª4áâà2,15ª5
7700000000019450013
15ª5áâà2,15ª6,15ª7,15ª7áâà1,15ª7áâà2
7700000000019450014
15ª8,15ª8áâà1,15ª9,16ª1,16ª1áâà1,16ª2
7700000000019450015
16ª3,17ª1,17ª2,17ª3,17ª4,17ª5,17ª5áâà1
7700000000019450016
17ª6,17,17,18ª1,18ª2,18ª3,18ª4
7700000000019450017
19áâà4,19ª1,19ª2,19ª3,19ª4,19ª5,19ª22
7700000000019450018
19ª30,19ª30áâà1,19ª32,20ª1,20ª2,20ª3
7700000000019450019
20ª4,20ª4áâà1,20ª5,20ª5áâà1,20ª6,20ª7
7700000000019450020
20ª8,20ª8áâà1,21ª1,21ª1áâà1,21ª1áâà3
7700000000019450021
21ª2,22ª1,22ª1áâà1,22ª2,22ª3,22ª4,22ª5
7700000000019450022
23áâà2,23ª1,23ª2,23ª3,23ª3áâà1
7700000000019450023
23ª3áâà2,23ª4,24ª1,24ª2,24ª3,24ª4,24ª5
7700000000019450024
24ª6,24ª6áâà1,24ª7,24ª7áâà1,24ª8,24ª9
7700000000019450025
24ª10,25ª1,25ª2,25ª3,26ª1,26ª2
7700000000019450026
26ª2áâà1,26ª2áâà2,27,27ª1,27ª2
7700000000019450027
27ª2áâà2,27ª3,27ª4,28ª1,28ª2,28ª3
7700000000019450028
28ª3áâà1,29ª1,29ª1áâà1,29ª2,29ª2áâà1
7700000000019450029
29ª2áâà2,29ª3,29ª4,30áâà1,30ª1,31áâà
7700000000019450030
31ª1,31ª2,31ª3,31ª3áâà2,31ª4,31ª5,31ª6
7700000000019450031
32ª1,32ª2,32ª3,33ª1,33ª1áâà2,33ª2,33ª3
7700000000019450032
33ª4,33ª5,34ª1,34ª2,34ª2áâà1,35ª1,35ª2
7700000000019450033
35ª3,35ª4,36,37,37áâà2,37ª3,38ª1,38ª2
7700000000019450034
38ª3,39ª1,39ª2,39ª3,39ª4,40,40áâà1
7700000000019450035
40áâà2,42ª1,44ª1,44ª2,44ª2áâà1,44ª2áâà2
7700000000019450036
3,3áâà1,4ª1,4ª2,4ª3,5ª1,5ª2,6,6áâà1,7
7700000000019460001
7áâà1,8,8áâà2,9,10,10ª1,11,12,13,14,15
7700000000019460002
16,17,18,19,20,20áâà2,22,24
7700000000019460003
4áâà2,4áâà3,4áâà4,6,6áâà2,6áâà3,6áâà4
7700000000019470001
6áâà5,8áâà1,8áâà2,9/11
7700000000019470002
9,9ª1,9ª1áâà1,9ª2,9ª3,10áâà10,11
7700000000019480001
117420
11áâà1,11ª1,11ª1áâà1,11ª1áâà2,11ª2
7700000000019480002
13ª1,13ª2,13ª2áâà1,13ª2áâà2,13,13
7700000000019480003
13,13,15,15áâà1,17/68,21ª3
7700000000019480004
1,1ª3,1,3
7700000000019480005
6,6ª1,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5
7700000000019480006
7700000000019480007
8áâà12,8áâà13,8ª1,8ª2,8ª3,8ª4,10áâà1
7700000000019480008
10áâà2,10áâà3,10áâà4,10áâà5,10áâà6,10
7700000000019480009
7700000000019480010
10áâà5,10áâà6,10áâà7,10áâà8,10ª1
7700000000019480011
10ª1áâà1,10ª1áâà2,10,10,10áâà1
7700000000019480012
10áâà2,10áâà3,10,12áâà1,12áâà2,12ª1
7700000000019480013
12ª2,12,14ª1,14ª2,16,16áâà1,16áâà2
7700000000019480014
7700000000019480015
16áâà8,16ª1,16ª2,16ª3,16ª4,16ª5,16ª6
7700000000019480016
16ª7,16áâà1
7700000000019480017
1,1áâà1,2ª1,2ª2,3,3áâà1,3áâà2,3,3,4
7700000000019490001
4áâà1,4ª2,4ª3,5,5áâà1,5áâà2,5ª2,6ª1
7700000000019490002
6ª2,6ª3,8,8áâà2,8áâà5,8áâà16,8ª2
7700000000019490003
8áâà1,10ª1,10ª2,10ª3,12ª1,12ª2,12ª3
7700000000019490004
14,14áâà2,14áâà3,14áâà4,14áâà5
7700000000019490005
3,3áâà1,5,5áâà2,7,9,11,13,15,15áâà2,17
7700000000019500001
17áâà1,17áâà2,19,19áâà2,19áâà3,34,34áâà1
7700000000019500002
1áâà1,1áâà2,15,15áâà1,15áâà2,17
7700000000019510001
8áâà1,8áâà2,8áâà3,10áâà1,10áâà2,10áâà3
7700000000019530001
10áâà4,10ª2,13,15
7700000000019530002
4áâà1,4áâà2,4áâà4,4áâà5,4áâà6,6,8
7700000000019540001
8áâà1,13,13áâà1,15,17,19,21,22áâà1
7700000000019540002
22ª1,22ª2,22ª3,22ª3áâà1,23,23áâà1,25ª1
7700000000019540003
25ª2,25ª3,26ª1,26ª2,26ª3,27,27áâà2,32
7700000000019540004
32áâà1,34
7700000000019540005
1,2,2áâà1,2áâà2,2,3,4,4áâà1,5,6,7,9
7700000000019550001
10,11,13,15,17,17,19,19áâà1,19áâà2,21
7700000000019550002
4áâà1,4áâà2,7,7áâà1,8,9,11áâà1,11/2,12
7700000000019560001
12áâà2,13,14áâà1,14áâà2,14áâà3,20áâà1
7700000000019560002
20áâà2,22/13
7700000000019560003
7700000000019570001
35áâà6,35áâà7,35áâà9,35áâà10,35áâà26
7700000000019570002
35áâà27,37ª1,37ª2áâà1,39ª1,39ª2,41
7700000000019570003
43áâà1,43ª1,43ª1áâà2,43ª2,45,45áâà1,47
7700000000019570004
47ª1áâà1,49ª1,49ª2,51ª1
7700000000019570005
19,21ª1,21ª2,23ª1,23ª1áâà2,23ª2
7700000000019570006
23ª2áâà1,23ª2áâà2,23ª3,25,25áâà2,27ª1
7700000000019570007
27ª2,29ª1,29ª1áâà1,29ª1áâà2,29ª2,29ª3
7700000000019570008
31,33áâà6,33áâà12,33ª1,33ª2,33ª3,33ª4
7700000000019570009
33áâà1,33,33áâà5
7700000000019570010
36,38áâà2,38ª1,38ª2,38ª2áâà2,38ª2áâà4
7700000000019570011
38ª3,38ª3áâà2,40áâà2,40ª1,40ª3,40ª4
7700000000019570012
42ª1,42ª2,42ª2áâà4,42ª3,44ª1,44ª2
7700000000019570013
44ª2áâà1,44ª2áâà2,46ª1,48ª1,48ª2,50
7700000000019570014
50áâà1,50áâà2,50áâà3,50áâà4,50áâà5
7700000000019570015
50áâà6,50áâà7,50áâà8,50áâà9,50áâà10
7700000000019570016
50áâà11,50áâà12,50áâà13,50áâà14
7700000000019570017
50áâà15,50áâà16,50áâà17,50áâà18,52ª1
7700000000019570018
52ª2,52ª3,52ª3áâà5,52ª4,52ª5,52ª6áâà1
7700000000019570019
52ª6áâà2,52ª6áâà3,52ª6áâà4,52ª6áâà5
7700000000019570020
52ª6áâà6,54
7700000000019570021
3,3ª2,4,5,5ª2,5ª2áâà1,6,7ª1,7ª2,7ª3
7700000000019570022
123423
7ª3áâà2,8,9áâà1,9áâà2,9áâà3,9ª2,9ª3
7700000000019570023
9ª4,9ª5,9ª6,10ª1,10ª2,10ª2áâà3,10ª3
7700000000019570024
11ª1,11ª2,11ª2áâà2,11ª3,11ª4,12ª1,12ª2
7700000000019570025
12ª3,12ª4,12ª5,12ª6,13ª1,13ª2,13ª3
7700000000019570026
13ª4,14ª1,14ª2,14ª3,14ª4,15ª2,15ª3
7700000000019570027
15ª4,15ª5,15ª7,15ª7áâà2,15ª7áâà4,16ª1
7700000000019570028
16ª2,16ª3,16ª4,17ª1áâà1,17ª2,17ª2áâà2
7700000000019570029
18,20ª1,20ª2,20ª2áâà2,20,22ª1,22ª2
7700000000019570030
22ª2áâà2,22ª2áâà3,22ª3,22ª4,24,24áâà2
7700000000019570031
24áâà3,26ª2,26ª2áâà1,26ª2áâà2,28,28ª1
7700000000019570032
28ª1áâà2,28ª1áâà4,28ª2,30áâà1,32,34
7700000000019570034
34áâà1,34áâà2,34áâà4,34áâà5,34áâà6
7700000000019570035
34áâà8,34áâà13,34áâà16
7700000000019570036
37/5áâà1
7700000000019580001
1áâà3,3,5,5áâà2,5áâà3,5áâà5,5áâà6
7700000000019580002
5áâà12,5áâà13,7,7áâà2,7áâà4,10áâà1
7700000000019580003
17áâà24,17áâà27,17áâà28,17ª1,17ª1áâà1
7700000000019580004
17ª1áâà2,17ª1áâà3,17ª1áâà4,17ª1áâà5
7700000000019580005
17ª1áâà9,17ª1áâà10,17ª1áâà12,17ª1áâà13
7700000000019580006
5áâà1,5áâà2,5áâà3,5áâà4,5áâà5,5áâà6
7700000000019590001
1,1áâà1,1áâà2,1áâà3,3,5,9,11,13,15
7700000000019610001
23,25,27,29,31
7700000000019610002
1/18áâà1
7700000000019620001
3,6,6áâà2,8áâà2,8ª1,11,11áâà2
7700000000019630001
13_15áâà1,13_15áâà2,13_15áâà3
7700000000019630002
13_15áâà8,17,17áâà1,17áâà2,18/11áâà4
7700000000019630003
2,3áâà1,3áâà2,3áâà3,3áâà6,4áâà2,4áâà7
7700000000019640001
4ª1,4ª2,4ª4,5áâà1,5áâà2,5áâà3,5áâà7,6
7700000000019640002
7,7áâà2,8áâà1,8áâà2
7700000000019640003
1áâà1,2áâà1,2áâà2,2áâà3,4,6,6áâà1
7700000000019650001
117246
6,7,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5
7700000000019650002
8áâà6,8áâà7,8áâà8,8áâà9,8áâà11,8áâà12
7700000000019650003
8áâà13,8ª1,8ª2,9,10,11,11,11áâà1
7700000000019650004
11áâà2,12,12áâà1,13,14áâà1,14áâà3
7700000000019650005
14áâà4,14áâà5,15áâà1,15áâà2,15áâà3
7700000000019650006
15áâà4,15áâà5,15áâà6,15áâà7,15áâà8,18
7700000000019650007
18,20áâà1,20áâà2,20áâà3,20áâà4,20áâà5
7700000000019650008
20áâà6,20áâà7,20áâà8,20áâà9
7700000000019650009
20áâà2
7700000000019670001
10,10áâà1,14,16,16áâà2,18,20,20,22
7700000000019670002
22áâà1,22áâà2
7700000000019670003
23áâà1,23ª1,23ª2,23ª3,23ª3áâà1,23ª4
7700000000019670004
23ª5,25ª1,25ª1áâà1,25ª2,25ª3,25ª4,27ª1
7700000000019670005
27ª2,27ª2áâà1,27ª2áâà2,27ª3,27ª4,27ª5
7700000000019670006
27ª5áâà1
7700000000019670007
28ª1,30/43,32,34,36,36ª1,38,40,42
7700000000019670008
24áâà1,24áâà2,24áâà3,24áâà4,24áâà5
7700000000019670009
24áâà6,24áâà9,24áâà10,24áâà13,24áâà17
7700000000019670010
26áâà1,26áâà2,26áâà5,26áâà6,26áâà7
7700000000019670011
46,46áâà1,46áâà2,48,50,50áâà2,52/27
7700000000019670012
54/26,56,56áâà1,56áâà2
7700000000019670013
57,57áâà1,57áâà2,59,59_,61,61ª1
7700000000019670014
61ª1áâà1,61ª2,61ª3,61ª4,61ª4áâà1,61ª5
7700000000019670015
61ª6,63,63ª1,63ª2,63ª3,65,65ª1,65,67
7700000000019670016
67ª1,67ª2,67ª3,67ª3áâà1,67ª4,69
7700000000019670017
75
7700000000019670018
31,31ª2,31ª4,33/2,33/2áâà1,35,35ª1
7700000000019670019
35ª2,35ª2áâà1,35,35,37ª1,37ª2,39ª1
7700000000019670020
39ª2,39ª2áâà1,41/45ª1,41/45ª2,45
7700000000019670021
45áâà1,45ª1,47,47áâà1,47áâà2,47áâà3
7700000000019670022
47ª1,47ª2,47ª3,47áâà1,49
7700000000019670023
51/21
7700000000019670024
1ª1,1ª2,1ª2áâà2,3,5ª1,5ª2,5ª2áâà2
7700000000019670025
2,2áâà3,4,4,4áâà1,4áâà2,4áâà3
7700000000019670026
4áâà4,6,6áâà1,6áâà2,6áâà3,6áâà5
7700000000019670027
7ª1,7ª2,9ª1,9ª1áâà1,9ª1áâà2,9ª1áâà3
7700000000019670028
9ª2,9ª2áâà2,9,11ª1,11ª1áâà1,11ª1áâà2
7700000000019670029
11ª2,15ª1,15ª2,17ª1,17ª2,17ª2áâà1
7700000000019670030
17ª2áâà2,21,21áâà1,21
7700000000019670031
10,12,14ª1,14ª2,16,16áâà5,16ª1,16ª2
7700000000019710001
16ª2áâà2,16ª3,18,20,22,22áâà2,24,28
7700000000019710002
7700000000019710003
7700000000019710004
19áâà8,19áâà9,19áâà10,19áâà11,19áâà12
7700000000019710005
19áâà13,19áâà14,19áâà15,19áâà16
7700000000019710006
19áâà17,30ª1,30ª2,30ª3,30ª3áâà9,30ª4
7700000000019710007
30ª4,32ª1,32ª2,34ª1,34ª2,34ª3,36,40
7700000000019710008
40áâà2
7700000000019710009
2,2áâà2,4,6,6áâà2,8,11,13áâà1,13áâà2,15
7700000000019710010
2,2áâà2,3,3áâà2,5áâà1,5áâà1,5,7
7700000000019730001
7áâà4,7áâà5,7áâà6,7áâà7,7áâà8,7ª1,7ª2
7700000000019730002
9,9ª1,11,11áâà1
7700000000019730003
6,8,8áâà1,8ª1,8ª2,8ª3,8ª4,8ª5áâà1,8ª6
7700000000019730004
8ª7,10,10,12,13,13áâà1,13áâà2,13áâà4
7700000000019730005
13ª1,13ª2,13ª3,14ª1,14ª2,14ª3,14ª4
7700000000019730006
14ª5,14ª6,14ª7,14ª8,14ª9,14ª10,15ª1
7700000000019730007
15ª2,15ª3,15ª4,17,17ª1,17ª2,17ª2áâà2
7700000000019730008
17ª3,17ª4,17ª4áâà2,17,19ª1,19ª2,21
7700000000019730009
23ª1,23ª2,25
7700000000019730010
1áâà1,1ª1,1ª1áâà1,1ª1áâà2,1ª2,1ª3,1ª4
7700000000019730011
1ª4áâà1,1ª4áâà2
7700000000019730012
áâà1,8,8áâà1,9ª1,9ª2,10áâà1,10ª1,12ª1
7700000000019750001
12ª2,13ª1,13ª1áâà1,13ª2,15ª1,15ª2,16
7700000000019750002
18,18ª1,19,20ª1,20ª2,21,21ª1,22,22áâà2
7700000000019750003
23,23ª1,23ª2,25,25ª1
7700000000019750004
1,1ª1,1ª2,1ª3,1ª3áâà,1ª3áâà4,3,4ª1
7700000000019760001
4ª2,5ª1,5ª1áâà3,5ª2
7700000000019760002
7ª1,7ª1áâà2,7ª2,8ª1,9,9ª3áâà2,10,11
7700000000019760003
11áâà1,11áâà2,13ª1,13ª1áâà2,13ª2,18
7700000000019760004
18áâà1,18áâà3,18áâà6,18ª1
7700000000019760005
1/25,1/25áâà1,1/25áâà3,2,4,8,10,12,14
7700000000019780001
14áâà2,14áâà3
7700000000019780002
3/10,4,6,8,9/15,10,10áâà10,10áâà13
7700000000019790001
11/22,12,14/16,15/7,16/13
7700000000019790002
1,3,4áâà1,4áâà2,5,6áâà1,6áâà2,7,9,10
7700000000019800001
11,14áâà1,14áâà2,14áâà3
7700000000019800002
8,13áâà1,13áâà2
7700000000019810001
2,3,4,6,8,8áâà2,10,10áâà1,12,12ª1,14
7700000000019820001
7700000000019830001
5,7,9,9,11,11áâà1
7700000000019840001
7700000000019850001
1áâà7,1áâà8,1áâà9,1áâà10,1áâà11,1áâà14
7700000000019850002
1áâà15,1áâà16,1áâà17,1áâà18,1áâà19
7700000000019850003
1áâà20,1áâà21,1áâà22,1áâà23,1áâà24
7700000000019850004
1áâà25,1áâà26,1áâà27,1,1áâà3,1áâà5
7700000000019850005
7700000000019850006
1áâà11,1áâà13,1áâà14,2ª1,3,3áâà2
7700000000019850007
3áâà3,3áâà6,3áâà13,3áâà21,3áâà23
7700000000019850008
3áâà24,3áâà25,3áâà27,3,3áâà1,4,4,5
7700000000019850009
7700000000019850010
5áâà8,5áâà9,5áâà10,5áâà12,5áâà13,5,6
7700000000019850011
6,8,8áâà2,8,8áâà1,8áâà2,11,13ª1
7700000000019850012
13ª2,13ª2áâà2,14,15/27,16ª1,16ª1áâà1
7700000000019850013
3,4,5,6,7,9,11,11áâà,11,12áâà1,13
7700000000019890001
13áâà4,14áâà1,14áâà2,14áâà3,14áâà4
7700000000019890002
14áâà6,16,16áâà2
7700000000019890005
17,17áâà1,17áâà2,17áâà5
7700000000019890006
7áâà1,7áâà2,7áâà3
7700000000019890004
1ª1,1ª2,1ª3,1ª3áâà1,1ª3áâà2,1áâà1,2
7700000000019900001
3áâà1,4,4áâà2,4,4áâà2,5,5,5áâà2
7700000000019900002
5áâà3,5áâà7,6,6,7,7áâà2,8ª1,8ª2,9
7700000000019900003
11,11áâà1,11,13,13,15áâà2,15ª1,15ª2
7700000000019900004
15ª3,15,17,17áâà2,17ª2,17ª3
7700000000019900005
19ª1,19ª2,19ª3,21áâà4,21ª1,21ª2,21ª3
7700000000019900006
25ª1,25ª2,27áâà1,27ª1,27ª2,27ª2áâà1
7700000000019900007
45263585000
27ª3,29,29áâà1,29áâà3,31,31ª1,31ª2
7700000000019900008
31ª2áâà1,33,35ª1,35ª2,37
7700000000019900009
10,10áâà2,10áâà3,10/1áâà6,10,10
7700000000019900010
105425
10áâà1,10áâà3,10áâà4,10áâà5
7700000000019900011
10áâà6,10,12,12áâà6,12,12áâà3
7700000000019900012
12áâà5,12áâà7,12
7700000000019900013
14ª1,14ª2,16áâà4,16ª1,16ª2,16ª3,18,20
7700000000019900014
22,22áâà3,22,22áâà1,24,24,26ª1,26ª2
7700000000019900015
1,1áâà2,3,4,5
7700000000019940001
7700000000019960001
7áâà7,7áâà8,7áâà15,7áâà16,7áâà17
7700000000019960002
7700000000019960003
7áâà23,9,9ª2,9ª5,9ª6,9ª7,9ª8,9ª9,9ª10
7700000000019960004
9ª12,9ª13,10
7700000000019960005
3,6áâà1,6áâà2,20/4
7700000000019980001
7700000000019990001
1áâà1,3,4áâà1
7700000000020000001
3áâà1,4áâà2,4áâà3
7700000000020010001
2,2áâà2,3áâà1,3áâà2,3áâà4,3áâà8
7700000000020020001
3ª2,3ª2áâà1,3ª3,3ª4,3ª4áâà3
7700000000020020002
4_6áâà3,4_6áâà4,5áâà1,5áâà2,5áâà3
7700000000020020003
5áâà4,5áâà5
7700000000020020004
3_,4,5,5ª1,5ª2,5ª2áâà1,5ª3,6áâà1,6ª1
7700000000020050001
6ª2,6ª2áâà1,6ª2áâà2,6ª2áâà3,6ª3
7700000000020050002
6ª3áâà1,7,9,10,11,11ª2,11,11,11áâà1
7700000000020050003
11,11áâà2,11áâà3,11áâà1,11áâà2
7700000000020050004
11,12ª1,12ª1áâà1,12ª2,12ª3,13,15ª1
7700000000020050005
15ª2,15ª2áâà1,15ª3,17,19,21,23ª1,23ª2
7700000000020050006
23ª3,23ª4,25,27,27áâà,27ª1,27ª2,27ª3
7700000000020050007
31,31áâà1
7700000000020050008
ª2,1,3áâà1,3áâà2,3áâà3,4ª1áâà2,4ª1áâà3
7700000000020060001
4ª2,4ª6,4ª7,4ª8,5,5áâà2,5_7áâà2
7700000000020060003
5_7áâà3,5_7ª2,6,6áâà1,7,7áâà1,7áâà3
7700000000020060004
7ª1,7ª2,8,8ª2,8ª3,11,14ª1,14ª1áâà2
7700000000020060005
14ª2,15,15áâà1,15áâà2,16,16áâà1,16ª1
7700000000020060006
16ª2,16ª2áâà3,16ª3,16ª4,16,17,17áâà1
7700000000020060007
17áâà2,18ª1,18ª2,20ª1,20ª2,20ª2áâà2
7700000000020060008
40ª2áâà3,40ª3,40ª6,40ª7,40ª7áâà1,40ª8
7700000000020060009
20ª3,20ª4,20ª5,20ª5áâà2,20ª6,20ª7,20ª8
7700000000020060010
20ª8áâà2,20ª9,22,22áâà2,23áâà1,24,26
7700000000020060011
28,28áâà1,30ª1,30ª2,32,34ª1,34ª1áâà1
7700000000020060012
34ª2,34ª2áâà3,34ª3,34ª3áâà1,34ª3áâà2
7700000000020060013
34ª4,34ª5,34ª5áâà2,34ª6,34ª7,34ª7áâà1
7700000000020060014
36,36áâà2,36ª1,36ª1áâà1,36ª2,36ª2áâà1
7700000000020060015
36ª3,36ª3áâà1,36ª5,36ª5áâà1,36ª6áâà2
7700000000020060016
36ª10,36ª11,38ª1,38ª1áâà1,38ª2
7700000000020060017
38ª2áâà1,38ª3,38ª4,38ª4áâà1,38ª4áâà2
7700000000020060018
38ª4áâà3,40,40áâà1,40ª1,40ª2,40ª2áâà2
7700000000020060019
40ª8áâà1,40ª9,40ª11,40ª12áâà2,40ª14
7700000000020060020
40ª14áâà1,40ª15,40ª16,40ª16áâà1,40,42
7700000000020060021
44,44áâà1
7700000000020060022
38áâà1
7700000000020060002
3,4/8,4/8áâà2,6,6áâà2,6áâà3
7700000000020070001
17áâà3,17ª2
7700000000020080001
1,1áâà2,2ª1,3,5,11ª,11,11áâà1,11áâà1
7700000000020080002
11áâà1,11áâà6,11áâà7,11áâà1,11áâà2
7700000000020080003
11áâà4,11áâà5,11áâà10,11áâà21
7700000000020080004
11áâà25,11áâà32,11áâà1,11áâà2
7700000000020080005
11áâà4,11áâà5,11áâà6,11áâà8
7700000000020080006
3/4
7700000000020090001
8áâà1,8áâà2,10,10áâà2,12áâà1,12áâà2
7700000000020090002
12áâà3,12áâà4,12áâà5
7700000000020090003
19,19áâà2,19ª1,19ª1áâà2,21,21,21áâà1
7700000000020110001
22,22ª1,22ª1áâà1,23,23áâà1,23áâà2,23
7700000000020110002
23áâà1,24,24áâà2,24ª1,25,26,26áâà2,27
7700000000020110003
28,29,30,30áâà2,31,32,33,33áâà1,34
7700000000020110004
34áâà2,35áâà2,35ª1,35ª2,35ª2áâà1,36,37
7700000000020110005
37áâà1,38,38áâà1
7700000000020110006
7700000000020110007
1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà5
7700000000020110008
3,3ª1,4,4áâà1,4áâà2,4áâà3,5,6,7,7áâà1
7700000000020110009
7ª1,7ª1áâà1,7,7áâà1,8,9,10,10áâà1
7700000000020110010
10áâà2,10ª1,11,11ª2,12,13,13áâà2,13ª1
7700000000020110011
13ª1áâà1,14,14ª2,14,16,16áâà2,16áâà3
7700000000020110012
16ª1
7700000000020110013
1,1áâà2,2ª1,2ª2,2ª3,3,3áâà2,4áâà3,4ª1
7700000000020120001
4ª2,4ª3,5,6ª1,6ª2,6ª2áâà1,6ª2áâà3,7
7700000000020120002
7áâà2,8ª1,8ª2,8ª3,9,9ª2,10ª1,10ª2,11
7700000000020120003
11áâà2,12áâà2,12ª1,12ª1áâà2,12ª2,13
7700000000020120004
14ª1,14ª2,15,16,16áâà1,17,18,19ª1
7700000000020120005
19ª1áâà1,19ª2,19ª2áâà2,19ª2áâà2,20
7700000000020120006
21,23,23áâà2,23áâà3,23áâà4,23áâà5
7700000000020120007
23áâà6,23áâà7,23áâà8,23áâà9,23áâà10
7700000000020120008
23áâà12,23áâà13,23áâà14,23áâà28
7700000000020120009
23áâà29,23ª2
7700000000020120010
1,1áâà1,1ª1áâà1,3,3ª2,4ª1,4ª1áâà1,4ª2
7700000000020130001
5ª1,5ª2,6ª1,6ª2,6ª2áâà2,6ª3,6ª4,7,7ª2
7700000000020130002
8ª1,8ª2,8ª3,9,9ª2,9ª2áâà1,10ª1,10ª2
7700000000020130003
10ª2áâà2,10ª3,10ª3áâà1,10,11,11áâà11
7700000000020130004
12ª1,12ª2,12ª3,14ª1,14ª2,14ª3,14ª3áâà1
7700000000020130005
14ª3áâà2,16ª1,16ª2,16ª3,16ª6,18
7700000000020130006
3,3áâà2,4,5,5áâà2,7,9,11,12,12,13
7700000000020140001
15,15ª2,17,19,19ª2,21,21ª2,21ª2áâà2
7700000000020140002
23ª2,25,25áâà2,27áâà1,27ª1,29,29áâà2
7700000000020140003
7700000000020140004
4,4ª2,6ª1,6ª2,8,8áâà2
7700000000020140005
1,3,3,4ª1,4ª2,4ª2áâà2,4ª3,4ª4,4ª4áâà1
7700000000020170001
4ª4áâà2,5,5áâà2,5áâà3,5,6,7,8,9,9
7700000000020170002
10áâà1,10áâà2,10áâà3,11,11áâà2,12áâà1
7700000000020170003
12áâà2,13,13ª1,13ª1áâà1,13ª1áâà3
7700000000020170004
14áâà1,14áâà2,14áâà3,15,16áâà1,16áâà2
7700000000020170005
7700000000020170006
16áâà8,16áâà9,16áâà10,16áâà11,16áâà12
7700000000020170007
16áâà13,16áâà14,16áâà15,16áâà16
7700000000020170008
16áâà19,16áâà20,16áâà22,16áâà23
7700000000020170009
16áâà24,16áâà29,16áâà30,16áâà31
7700000000020170010
16áâà32,16áâà33,16áâà1,17,18áâà5,18ª1
7700000000020170011
18ª2,18ª3,18ª4,18ª4áâà2,18ª5,19ª1,19ª2
7700000000020170012
20,20áâà1,20áâà2,20áâà5,20áâà6
7700000000020170013
20áâà7,21,21áâà2,22áâà1,22áâà8
7700000000020170014
22áâà11,22áâà12,22áâà13,23,25
7700000000020170015
2,3áâà1,4,5,6,6,7,7,7áâà2,7,8,8,9
7700000000020180001
9,9áâà2,11,11áâà1,11áâà2,11áâà3
7700000000020180002
13,15áâà1,15áâà2,15ª1
7700000000020180003
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6,4
7700000000020200001
4áâà1,4áâà2,4áâà3,6áâà1,6áâà2,6áâà3
7700000000020200002
6áâà4,6áâà5,6áâà6,6áâà7,6áâà8,6áâà9,6
7700000000020200003
6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000020200004
6áâà6,6áâà7,6áâà8,6áâà9,8áâà1
7700000000020200005
8áâà2,8áâà3,8áâà4,8áâà5,8áâà1,8áâà2
7700000000020200006
8áâà3,8,8áâà1,12,17
7700000000020200007
1,3,4áâà1,5,6,7,8,8,9,10,10áâà1,11,12
7700000000020210001
13,15,15,16,17,18,19,19áâà1,19áâà1
7700000000020210002
20,21,22,23,24áâà1,25,26,26áâà1,27
7700000000020210003
27ª1,28,28áâà1,28áâà2,29áâà1,29áâà2,30
7700000000020210004
31,31áâà1,32,33,34,36,37,37áâà1,37áâà3
7700000000020210005
38,39,40,40áâà1,41,41,42,43,43
7700000000020210006
43áâà1,44,45,46,47,48,49,50,51,52
7700000000020210007
52áâà1,53,54,55,56,56,57,58,59,60,61
7700000000020210008
62,63,64,64áâà1,65,66,67,68,68,69
7700000000020210009
69áâà1,69áâà2,69ª1,69ª2,69ª3,70,71
7700000000020210010
71ª1,71ª2,71ª3,71ª4,71ª5,72,73,73ª1
7700000000020210011
73ª2,73ª3,73ª4,73ª5,74áâà2
7700000000020210012
1,1áâà1,2,3,3áâà2,4,5,6,7,9,10,11,12
7700000000020220001
141700
13,14,14áâà1,14áâà2,14áâà3,14áâà4
7700000000020220002
14áâà5,14áâà6,15,15áâà1,16,17,18,19
7700000000020220003
20,21,22,23,24,24áâà1,25,26,27,28,29
7700000000020220004
30,31,32,33,34áâà1,34áâà2,35,36,38,47
7700000000020220005
48,49áâà1,49áâà2,50,51,52,53áâà1
7700000000020220006
53áâà2,54,55áâà1,55áâà2,55áâà3,56,57
7700000000020220007
58,59,60áâà2,60áâà3,60áâà4,60,61,62
7700000000020220008
63,64,65,67,68áâà1,68áâà2,69,70
7700000000020220009
7,12áâà1,12áâà2,12áâà3,12áâà4,12áâà5
7700000000020250001
7700000000020250002
7700000000020250003
12áâà15,12áâà16,12áâà17,12áâà18
7700000000020250004
12áâà19,12áâà20,12áâà21,12áâà35
7700000000020250005
12áâà36,14áâà1,14áâà2,14áâà3,14áâà4
7700000000020250006
14áâà5,14áâà7,23áâà1,23áâà2,23áâà3
7700000000020250007
7700000000020250008
23áâà9,23áâà10,28áâà1,28áâà2,28áâà4
7700000000020250009
28áâà5,36áâà1,36áâà2,36áâà3,36áâà4
7700000000020250010
7700000000020250011
36áâà10,36áâà11,36áâà12,36áâà13
7700000000020250012
36áâà14,36áâà15,36áâà22,36áâà23
7700000000020250013
36áâà24,47áâà1,47áâà2,47áâà3,49,59,59
7700000000020250014
7700000000020260001
7700000000020260002
7700000000020260003
7700000000020260004
7700000000020260005
5áâà6,5áâà7,5áâà8,5áâà9,5áâà10
7700000000020260006
5áâà11,5áâà19,5áâà20,5áâà21
7700000000020260007
2,2áâà10,2áâà10,2ª1,2ª2,2ª3,2ª4,2ª5
7700000000020270001
2ª8,2ª8,2ª9,2,2áâà1,2áâà2,2áâà3
7700000000020270002
2,6,6áâà1,8,8áâà1,8áâà5,8ª3,8ª4,8/8ª5
7700000000020270003
8/8ª6,10,11/5,11/5áâà2,11/5áâà3
7700000000020270004
11/5áâà5,11/5áâà6,11/5áâà8,11/5áâà9
7700000000020270005
11/5áâà10,11/5áâà11,11/5áâà12
7700000000020270006
11/5áâà14,11/5áâà19,11/5áâà20
7700000000020270007
11/5áâà21,11/5áâà22,11/5áâà23
7700000000020270008
11/5áâà24,11/5áâà25,12/11,12/11áâà2
7700000000020270009
12/11áâà3,12/11áâà7,12/11áâà8
7700000000020270010
12/11áâà9,12/11áâà10,12,26,26áâà2
7700000000020270011
26áâà3,26áâà4,26áâà5,26áâà6,26áâà7
7700000000020270012
13,14,14,14áâà1,14áâà2,15ª1,15ª2
7700000000020270013
16ª1,17ª1,17ª2,18,18áâà98,18áâà336
7700000000020270014
18ª1,18,19,19,19áâà2,19áâà3,21,22
7700000000020270015
23/8ª1,23/8ª2,25ª1,25ª2,25ª3,25ª4,25ª5
7700000000020270016
25ª6,25ª7,25ª8,27,27áâà1,27áâà2,27
7700000000020270017
3,9áâà1,9áâà2,11,14
7700000000020290001
28áâà1,29áâà1,29áâà2,29_31áâà6,30áâà1
7700000000020300001
30áâà2,30áâà3,30áâà4,31áâà1,32áâà2
7700000000020300002
32áâà3,32áâà4,33áâà1,33áâà2,34áâà1
7700000000020300003
34áâà3,35_37áâà1,35_37áâà2,35_37áâà3
7700000000020300004
36/2áâà1,36/2áâà2,38áâà1,38áâà2,39
7700000000020300005
39áâà2,39áâà5,40áâà1,40áâà2,40_42áâà1
7700000000020300006
42áâà1,42áâà2,42áâà3,42áâà5,43
7700000000020300007
43/16áâà1,43/16áâà2
7700000000020300008
1áâà1,1áâà2,1áâà3,3,5áâà1,7/11áâà1
7700000000020300009
7/11áâà3,9áâà1,9áâà2,11áâà1,11áâà2
7700000000020300010
11áâà4,11áâà5,11/13,13áâà1,13áâà1
7700000000020300011
13áâà2,23áâà1,23áâà4,23,23,25
7700000000020300012
27/6áâà1,27/6áâà2,27/6áâà3
7700000000020300013
4áâà4,4áâà5,4áâà6,4/12áâà1,4/12áâà2,6
7700000000020300015
12_14áâà4,12_14áâà5,12_14áâà8
7700000000020300016
12_14áâà9,16áâà3,16áâà10,18áâà1
7700000000020300017
18/10áâà3,22,24áâà1,24áâà2,24áâà3
7700000000020300018
24áâà3,24áâà4,24áâà11,26/8áâà1
7700000000020300019
26/8áâà3,26/8áâà5,26/8áâà7
7700000000020300020
1,4áâà1,4áâà2,5_7,10áâà1,10,11,12,13
7700000000020310001
15áâà1
7700000000020310002
10áâà1,10áâà2,13/15áâà1,13/15áâà2
7700000000020320001
13/15áâà3,13/15áâà4,13/15áâà5
7700000000020320002
13/15áâà6,13/15áâà7,13/15áâà8
7700000000020320003
13/15áâà9,13/15áâà10,13/15áâà11
7700000000020320004
13/15áâà12,14áâà1,14áâà2,14áâà3
7700000000020320005
5,5áâà2,5áâà3,7,7ª1,7ª1,7ª1,10
7700000000020330001
10áâà2,10áâà3,11,13,13áâà4,13áâà5
7700000000020330002
13_13áâà2,15_17áâà1,15_17áâà2,19
7700000000020330003
22áâà1,22áâà3,24,26áâà1,26áâà2,28,32
7700000000020330004
2,2ª1,4,6,8,10,12,14,14áâà1
7700000000020350001
1,1ª3,1áâà1,1áâà2,1áâà3,1áâà4
7700000000020360001
1áâà5,1áâà7,1áâà9,1áâà1,1áâà2
7700000000020360002
1áâà3,1áâà4,1áâà5,1áâà6,1áâà7
7700000000020360003
1áâà8,1áâà9,1áâà10,1áâà11,1áâà12
7700000000020360004
1áâà13,1áâà14,1áâà16,1,1áâà3
7700000000020360005
1áâà5,1áâà8,1,1áâà3,1áâà4,1,1
7700000000020360006
9áâà1,9áâà2,10,10áâà1,15áâà1,15áâà2
7700000000020360007
17,22áâà6,24,26áâà1,28áâà1
7700000000020360008
2ª1,2ª1áâà1,3,3áâà1,3áâà2,3áâà3,3áâà4
7700000000020370001
3áâà5,3áâà6,3áâà7,3áâà9,3,3áâà1
7700000000020370002
3áâà2,3áâà3,3áâà4,3áâà6,3áâà7,3
7700000000020370003
3áâà1,3áâà2,3áâà3,4,4áâà3,5,6,6ª1
7700000000020370004
7700000000020370005
7áâà7,7áâà8,7áâà10,7áâà11,8,8áâà1,8ª1
7700000000020370006
8ª1áâà1,8ª2,8ª2áâà1,8ª2áâà2,10,10áâà1
7700000000020370007
10ª1,10ª2,12,14,16,16áâà1
7700000000020370008
1,2,3,4,5,6,6,11,13,13,13áâà2
7700000000020380001
13áâà3,13áâà4,13áâà5,16,20,22,22
7700000000020380002
22,25,28,29,31,33,35,35áâà1,35áâà2,37
7700000000020380003
2,4,6,6áâà1,10,12,12áâà1,12áâà2
7700000000020390001
12áâà3,13,14,15,17,19,21,23,25,27
7700000000020390002
2,2áâà2,2áâà3,4,6,6áâà1
7700000000020400001
15,17,19,21,23,23áâà1
7700000000020400002
4,5áâà1,6,7,7áâà1,7,8,8,9,9áâà1,9ª1
7700000000020430001
9,10,10áâà1,10áâà2,10ª1,10ª1áâà1,10
7700000000020430002
10,11,11ª,12,12ª1,12ª1áâà1,12,13
7700000000020430003
13ª1,13,13,14,14ª,14ª1,15,16,16áâà1
7700000000020430004
7700000000020430005
7700000000020430006
8,8áâà1
7700000000020450001
2/1,4,4áâà8
7700000000020470001
4,4,6,8,8áâà2,8áâà3,8áâà4,8áâà9,10ª1
7700000000020480001
10ª2,10ª2áâà2,10
7700000000020480003
7700000000020480002
3,3áâà1,3
7700000000020480004
3ª3,3ª3áâà2,4ª4,6,6áâà5,7,8,8
7700000000020490001
2,3,4,4áâà1
7700000000020500001
1,1áâà1,1áâà2,3áâà3,3áâà4,3áâà6,3ª1
7700000000020510001
3ª2,3áâà1,3áâà2,4áâà2,4áâà3,4ª1,4ª2
7700000000020510002
1,1áâà1,3,3áâà1,3áâà2,3áâà3,4,5,5áâà1
7700000000020520001
6,7,8,10,12,12áâà1
7700000000020520002
3,4,5
7700000000020530001
3,3,3,5,5,5,6,6áâà1,6áâà2,6áâà4
7700000000020540001
6áâà5,6áâà6,6ª1,6ª216,6ª217,7,7,7,9
7700000000020540002
9,9,11,11áâà1,11áâà2,11áâà4,11áâà5
7700000000020540003
11,13,13,15,15,15áâà1,15áâà2,17
7700000000020540004
3,6,7,7áâà2,7áâà3
7700000000020550001
3,4áâà1,4áâà2,5,6áâà1,8,8áâà2,9,9áâà3
7700000000020560001
9_11,10,10áâà2,10áâà3,11áâà1,11áâà3
7700000000020560002
11ª2,12áâà2,14áâà2,14ª1,14ª2,15,16
7700000000020560003
25áâà3,25áâà4,25áâà5,26áâà1,27,27áâà2
7700000000020560005
28,28áâà2,29,30,32áâà1,34áâà1,34áâà2
7700000000020560006
36,38,38áâà2,40,40áâà2,42,42áâà2
7700000000020560007
1,2,2ª1,2ª1áâà2,2ª1áâà3,3,4,5,5áâà2,6
7700000000020570001
7,8,8áâà2,9,11,12áâà1,13,14
7700000000020570002
1,3,4,4,5,6,7,8,8áâà2,9,10,11,13_
7700000000020580001
13,15ª1,15ª2,15ª3,15ª3áâà4
7700000000020580002
6áâà1
7700000000020590001
4,5,6,7,8,9,10,11,12,13,14,15,16,17
7700000000020600001
17áâà11,18,19
7700000000020600002
2,3,4,5,6,7,9,10,11,11áâà1,12,13,14
7700000000020610001
15,16,17,19,20,21,22
7700000000020610002
2,3,4,5,6,7,8,9,10,11,12,13,13,14,15,16
7700000000020620001
1,2,3,5,7,9,11,13,15
7700000000020630001
1ª1,1ª2,1áâà1,3,3,4,5áâà2,5ª1,5ª2
7700000000020640001
6ª1,6ª2,6ª2áâà1,6ª2áâà3,6ª2áâà4,7
7700000000020640002
7áâà1,8,8,8áâà3,9ª1,9ª2,9ª2áâà2,11,11
7700000000020640003
3áâà3,3ª1,3ª2,3ª3,5,5áâà2,7áâà1,7áâà3
7700000000020650001
7áâà4,7áâà6,7áâà7,7áâà8,7áâà9,7áâà10
7700000000020650002
7áâà3,7áâà4,9,9áâà2,11áâà1,11áâà2
7700000000020650003
11áâà6
7700000000020650004
4,6áâà1,6áâà2
7700000000020660001
7700000000020670001
1áâà8,1áâà9,1áâà10,1áâà11,1áâà12,2,2
7700000000020670002
2áâà1,3,3,3áâà1,3áâà2,3áâà3,4,4
7700000000020670003
5áâà1,5áâà2,5áâà3,5áâà4,5áâà5,5áâà6,6
7700000000020670004
6,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000020670005
6áâà6,6áâà7,6áâà8,6áâà9,6áâà10
7700000000020670006
6áâà11,6áâà12,6áâà13,6áâà14
7700000000020670007
6áâà15,6áâà16,6áâà17,8,9,9,10áâà1
7700000000020670008
10áâà2,11,12,13,14,15,16,17,18,19
7700000000020670009
19áâà1,20,22,24,26,28,30,31,32,35,36
7700000000020670010
37,38,39,39,40ª1,41,42,43,44,45,46
7700000000020670011
46áâà2,46,46áâà1,46áâà2,46áâà3
7700000000020670012
46áâà4,46áâà6,46áâà7,46áâà8
7700000000020670013
46áâà9,46áâà10,46áâà11,46áâà12,47
7700000000020670014
48,50,51,52,53,54,55,56,57,59,60,61
7700000000020670015
61áâà2,62,63,64,65,66,67,68,69,70,71
7700000000020670016
71áâà6,72,73,74,75,76,78,80,82,84,86
7700000000020670017
86áâà2,88,90,92,94,96,98,110,112,114
7700000000020670018
116,118,120,122,124,126,126áâà1,128
7700000000020670019
130,132,132áâà1,134,136,138,138,140
7700000000020670020
142,144,146,148,150,152,154,156,158
7700000000020670021
160,162,164,166,168,170áâà1,170áâà6
7700000000020670022
172,174,176,178,180,182,182,184,186,188
7700000000020670023
7700000000020680001
1,5,6,7,8,9,10,11,12,12áâà2,13,14,15
7700000000020690001
16,17,18,18ª1,18ª1áâà1,19ª1,19ª2,20,21
7700000000020690002
22ª1,22ª2,22ª3,24ª1,24ª2,24ª3,25,26,28
7700000000020690003
12,16,18,18áâà1,18ª1,20/23
7700000000020710001
17,19,21ª1,21ª1áâà1,21ª2,21ª2áâà1,23
7700000000020710002
23áâà1,23áâà2,23áâà3,23ª1,23ª2,23ª3
7700000000020710003
23ª3áâà1,23ª4,23ª5,24,24áâà1,24ª1,24ª2
7700000000020710004
24,25,25áâà1,26,26ª1,26ª1áâà1
7700000000020710005
26ª1áâà2,26ª1áâà3,26ª1áâà4,27,29,31,34
7700000000020710007
34ª1,34ª1áâà1,34ª2,39ª1,39ª2,39ª3,41
7700000000020710008
41ª1,41ª2,41ª2áâà1
7700000000020710009
38ª1,38ª1áâà1,40ª1,42ª1,42,44ª1áâà1
7700000000020710010
44ª1áâà2,44ª1áâà3,44ª1áâà4,44ª1áâà5
7700000000020710011
44ª2,44ª3,44ª3áâà1,48,48áâà1,48áâà2
7700000000020710012
48áâà3,48áâà4,48ª2,49,49áâà1,49áâà2
7700000000020710013
49áâà3,49ª1,50,50áâà1,50ª1,50ª1áâà1
7700000000020710014
50ª2,50ª3,50ª3áâà1,52,52ª1,52ª2,52ª3
7700000000020710015
53áâà1,53ª1,53ª2,53ª2áâà1,53ª3,53ª4
7700000000020710016
53,55áâà1,55ª1,56ª1,56ª2,56ª3,57
7700000000020710017
57áâà1,57áâà2,57ª1,57ª1áâà1,57ª2,58
7700000000020710018
58ª1,59,59áâà1,59áâà2,59ª1,59ª1áâà1
7700000000020710019
60ª1,60ª2,61,61áâà1,61ª1,61,62ª1
7700000000020710020
62ª1áâà2,62ª2,62ª3,63,63áâà1,63ª1,63ª2
7700000000020710021
63ª2áâà1,63áâà1,64áâà1,64ª1,64ª2,64ª3
7700000000020710022
65,65áâà1,65áâà2,65ª1,65ª1áâà1,65ª2,66
7700000000020710023
66ª1,67,69
7700000000020710024
7/8,11ª1,11ª2,11ª3,11,13,15/29
7700000000020710025
7700000000020710006
1/14ª3,3,3ª1,3ª1áâà1,3ª2,4ª1,4ª2
7700000000020710026
4ª2áâà1,8,8/6ª3áâà1,10,10áâà1,10ª1
7700000000020710027
10ª1áâà1,10
7700000000020710028
1,3,5,5ª2,7,7ª1,7ª1áâà2,7ª1áâà3
7700000000020720001
7ª1áâà4,7ª1áâà5,7ª1áâà6,7ª1áâà7
7700000000020720002
7ª1áâà8,7ª1áâà9,9,11,11áâà1
7700000000020720003
2,4,4áâà2,6,8,8ª2,8ª4áâà2,10ª1,10ª2
7700000000020720004
10ª3,12,14,16,18áâà1,18ª1,18ª2,20
7700000000020720005
20áâà1,22
7700000000020720006
30áâà2
7700000000020730001
30,30áâà1,30ª2,30ª2áâà1,30ª2áâà2
7700000000020730002
30ª2áâà3,30ª3,30,32ª1,32ª1áâà1
7700000000020730004
32ª1áâà2,32ª2,32ª3,32ª3áâà1,32ª3áâà2
7700000000020730005
32ª4,38ª1,38ª1áâà1,38ª1áâà2,38ª2,38ª3
7700000000020730006
40ª2,40ª3,40ª3áâà1,40ª3áâà2,42áâà7
7700000000020730007
42áâà8,42áâà9,42ª1,42ª2,42ª3,42ª5,42ª6
7700000000020730008
42ª7,44áâà1,46áâà1,46áâà2,46áâà3
7700000000020730009
1,1áâà3,1áâà4,1áâà5,1áâà7,1
7700000000020730003
46áâà4,46áâà5,46áâà6,46áâà7
7700000000020730010
2áâà1,2áâà2,2áâà3,2áâà6,2áâà1,4áâà1
7700000000020730011
7700000000020730012
4áâà8,4áâà9,4áâà11,4áâà1,4,6,6ª1,6ª2
7700000000020730013
8ª3áâà3,8ª3áâà5,8ª3áâà6,8ª3áâà7
7700000000020730014
8ª3áâà8,8ª3áâà9,8ª3áâà10,8ª3áâà11
7700000000020730015
8ª3áâà12,8,12ª1,12ª1áâà1,12ª1áâà2
7700000000020730016
12ª2,12ª3,12ª3áâà1,12ª3áâà2,12ª4
7700000000020730017
12áâà1,12áâà2,12áâà3,14ª2,14ª2áâà1
7700000000020730018
14ª2áâà3,16ª1,16ª1áâà1,16ª1áâà2,16ª2
7700000000020730019
16ª3,22ª1,22ª1áâà1,22ª1áâà2,22ª2,22ª3
7700000000020730020
22ª3áâà1,22ª3áâà3,24,24ª2,24ª2áâà1
7700000000020730021
24ª2áâà2,24ª2áâà3,24ª2áâà4,24ª3,24ª4
7700000000020730022
24ª4áâà2,24ª4áâà3
7700000000020730023
6ª3,8áâà1,8áâà2,8áâà4,8ª3áâà1,8ª3áâà2
7700000000020730024
7700000000020730025
1áâà7,1áâà8,1áâà9,1áâà10,1áâà11,1ª1
7700000000020730026
1ª2,1ª3,1_áâà1,1áâà1,3,3ª2,3,3áâà1
7700000000020730027
3áâà2,3áâà3,3áâà4,3áâà5,3,5ª1
7700000000020730028
19ª1,19ª1áâà1,19ª1áâà2,19ª2,19ª3,19ª4
7700000000020730029
19ª4áâà1,19ª4áâà2,19ª5,21ª1,21ª1áâà1
7700000000020730030
21ª2,21ª3,21ª3áâà1,21ª3áâà2,21ª4,25
7700000000020730031
25/20,25/20áâà1,25/20áâà2,25
7700000000020730032
1,1,1,1áâà1,2,2ª1,3áâà1,5áâà1,5áâà2
7700000000020740001
6/2,7,8,9áâà5,11áâà1,11áâà3,13áâà1
7700000000020740002
13áâà2,14áâà1,15áâà1,15áâà3,16áâà1
7700000000020740003
16áâà5,17,18,18áâà1,19,20,22áâà1
7700000000020740004
1,2,3,4,5,6,6,6,7,7áâà2,7áâà3,7áâà4
7700000000020750001
7áâà6,9/13,26/10áâà1,26/10áâà2
7700000000020750002
4,5áâà1,5áâà4,5áâà5,6,8,10,10áâà12
7700000000020760001
11/16áâà1,11/16áâà2,12áâà1,12áâà7
7700000000020760002
1,2,2áâà1,4,4áâà1,4áâà2,5,6,7,7áâà1
7700000000020770001
1/4,2,3,4,5,6áâà1,6áâà9,7,7_,7,10
7700000000020780001
10áâà1,12áâà1,12áâà7,16,16/24,17áâà1
7700000000020780002
18,18áâà1,18áâà2,18áâà4,18áâà5,18áâà6
7700000000020780003
18áâà20,18áâà30,18,18áâà1,20/12
7700000000020780004
1,3áâà1,3áâà9,4áâà1,4áâà3,5áâà1,5áâà2
7700000000020790001
6áâà1,6áâà13,8,8áâà8
7700000000020790002
1/14áâà1,2áâà1,2áâà2,3,3áâà1,3áâà2
7700000000020800001
4áâà1,4áâà2,5,6,7áâà1,7áâà2,9/9,10,12
7700000000020800002
1,2áâà1,2áâà19,2áâà20,2áâà26,3,4,5áâà1
7700000000020810001
6,7áâà1,8áâà1,8áâà2,8áâà3,9/13
7700000000020810002
9/13áâà9,10,11/22áâà1,11/22áâà2,14
7700000000020810003
1,1áâà1,3,5,7_7áâà1,7_7áâà2,7_7áâà3
7700000000020820001
11,13,19áâà1,22,23
7700000000020820002
1,2,2áâà1,3,3,4,5,6,8,9/19,9/19áâà1
7700000000020830001
10/17,11/32,14
7700000000020830002
1/26,2,4,4áâà1,4áâà2
7700000000020840001
1áâà2,1áâà3,1áâà4,1áâà5,2,2áâà1,3áâà1
7700000000020850001
5,5áâà3,5_7áâà7,6,7áâà1,7/1áâà3,7,8
7700000000020850002
8áâà1,8áâà2,10,11áâà1,11áâà2,13,15
7700000000020850003
15áâà2,16,17,17áâà1,17áâà2,21,21áâà2
7700000000020850005
22,24,24áâà2,26,28,28áâà1
7700000000020850006
7700000000020850007
23,25,27,29,29áâà4,30áâà1,30/9,31/12
7700000000020850008
32áâà6,32áâà9,32áâà10,34,34áâà1,34áâà2
7700000000020850009
36áâà3,36áâà4,36/9,36/9ª1
7700000000020850004
19,19áâà2
7700000000020850010
127025
1,1áâà2,1áâà3,3,3áâà1,4,4,5,5áâà2,6
7700000000020870001
6áâà1,6áâà2,6ª1,7,8,11,13áâà1,13áâà2
7700000000020870002
1,2,3,4,5,6,7,7_,8,9,9áâà2,10,10áâà2
7700000000020890001
2,3,4,5,7,9áâà4,9ª1,9ª2,9ª3,9ª7,9ª8
7700000000020900001
9ª18,9,10áâà1,10áâà2,10áâà3,10áâà4
7700000000020900002
10áâà5,10áâà6,10áâà8,10áâà11,10áâà13
7700000000020900003
10áâà14
7700000000020900004
2,2áâà2,4,6,8
7700000000020910001
4,4áâà1,4,4ª1,21,21,23,27,29áâà1
7700000000020920001
29áâà2,30,30,31áâà1,31áâà2,31áâà3
7700000000020920002
31áâà4,38áâà1,38áâà2,38áâà3,38áâà4
7700000000020920003
38áâà5,38áâà6
7700000000020920004
3,5,6,7,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000020920005
7áâà6,8,8áâà1,9áâà1,9áâà2,9áâà3
7700000000020920006
7700000000020920007
9áâà10,9áâà11,9áâà12,11,11áâà1,11áâà1
7700000000020920008
11áâà2,11áâà3,11áâà4,12,12ª2,14,15ª2
7700000000020920009
15ª3,19áâà1,19ª2,19ª3,22,22áâà2,24
7700000000020920010
24áâà1,24áâà2
7700000000020920011
31áâà1,31áâà2,31áâà3,31áâà4,31áâà5
7700000000020930001
31áâà6,31áâà7,31áâà8,31áâà9,31áâà10
7700000000020930002
7700000000020930003
31áâà15,31áâà16,31áâà17,31áâà18
7700000000020930004
31áâà19,33,35ª1,35ª2,35ª2áâà1,35ª3,37
7700000000020930005
39,41,45,45áâà1,47,47,49,51,53,55
7700000000020930006
55áâà1,55áâà2,57,59,61,63,65áâà1
7700000000020930007
65/54,65/54áâà1
7700000000020930008
34/63áâà1,34/63áâà2,34/63áâà3,36ª1
7700000000020930009
36ª2,38,40áâà1,40áâà2,40áâà3,40áâà4
7700000000020930010
40áâà5,40áâà6,42,42áâà1,42áâà2,42áâà3
7700000000020930011
42áâà4,42áâà5,42áâà6,42áâà7,42áâà8
7700000000020930012
42áâà9,46,46áâà1,50
7700000000020930013
29,29áâà1,29áâà2,29áâà3,29áâà4,29áâà5
7700000000020930014
29áâà6,29áâà7,29áâà8,29áâà9,29áâà10
7700000000020930015
29áâà11,42
7700000000020930016
30/1áâà1,30/1áâà2,30/1áâà3
7700000000020930017
23,23áâà1,23áâà2,23áâà3,23áâà4,23áâà5
7700000000020930018
7700000000020930019
23ª2,23ª2áâà2,23ª3,23ª6áâà5,23áâà1,25
7700000000020930020
25áâà1,25áâà2,25áâà3,25,27ª1,27ª2
7700000000020930021
27ª2áâà1,27ª3,27ª4,27ª5,27ª8,27
7700000000020930022
3áâà1,3ª1,3ª2,3ª3,3ª4,3ª5,4ª1,4ª1áâà2
7700000000020930023
4ª3,5ª1,5ª2,5ª2áâà1,6,6áâà1,6ª2,6ª3,6
7700000000020930024
6áâà1,7,7áâà2,8,8áâà1,8áâà2,9,10áâà1
7700000000020930025
11,11áâà1,11áâà3,11ª2,11ª3,11,12,13
7700000000020930026
13áâà2,13ª1,13,14,15ª1,15ª1áâà1,15ª2
7700000000020930027
15ª2áâà1,16ª1,16ª1áâà2,16ª2,16ª2áâà1
7700000000020930028
16ª2áâà2,16áâà1,16áâà2,18,19ª1,19ª2
7700000000020930029
19ª2áâà1,19ª3,20,21áâà1,21áâà2,21áâà4
7700000000020930030
21,22,22áâà1,22ª1,22ª1áâà1,24,24áâà1
7700000000020930031
24áâà2,24,26,26,26áâà2,28ª1
7700000000020930032
28ª1áâà1,28ª2,28ª3,28ª3áâà2,28ª4
7700000000020930033
28ª4áâà1,28ª4áâà2,28ª5,28ª5áâà2,28ª6
7700000000020930034
28ª6áâà1,28ª6áâà2,28ª7,28ª8,28/2,28
7700000000020930035
28áâà1
7700000000020930036
3,4,5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000020940001
5áâà6,6áâà1,6áâà2,6áâà3,7áâà1,7áâà3
7700000000020940002
1,3áâà1,5,6/3áâà1,6/3áâà2,7,8/8
7700000000020970001
8/8áâà2,9,10,11,11áâà1,11áâà2,12,13
7700000000020970002
6áâà1,6áâà2,6áâà3,8áâà1,8áâà2,8áâà5,8
7700000000021000001
22/24áâà1,22/24áâà2
7700000000021000002
18/1áâà1,18/1áâà2,18/1áâà4,18/1áâà4
7700000000021000003
115324
18/1áâà5,18/1áâà8,20áâà1,20áâà2
7700000000021000004
26áâà5
7700000000021010001
8,10,11,11áâà1,11áâà2,12áâà1,12áâà2
7700000000021010002
16,16áâà1,16áâà3,16áâà4,17,17áâà3
7700000000021010003
18áâà1,18áâà2,18áâà4,18áâà5,18áâà8,20
7700000000021010004
22áâà1,22áâà3,24áâà1,24áâà4,24áâà5
7700000000021010005
24áâà6,26áâà2,26áâà3,26áâà4,26áâà6
7700000000021010006
1áâà1,1áâà4,1áâà12,1áâà13,3,4áâà1
7700000000021020001
4áâà2,7,8áâà1,8áâà2,10áâà1,12,14,16
7700000000021020002
7700000000021040001
7700000000021040003
1áâà11,1áâà12,1áâà1,1áâà2,2,2áâà1
7700000000021040004
2áâà2,2áâà3,2,4áâà1,4áâà2,4áâà3,4áâà4
7700000000021040005
5áâà1,5áâà2,5áâà3,5áâà4,5áâà7,5áâà8
7700000000021040006
5áâà9,5áâà10,5áâà13,5áâà14,5áâà15
7700000000021040007
5áâà16,5áâà17,5áâà18,5áâà19,5áâà1,6
7700000000021040008
6áâà2,7áâà1,7áâà2,7áâà3,7,8áâà1,8áâà2
7700000000021040009
8áâà3,8áâà4,8áâà6,8áâà7,8áâà8,9áâà1
7700000000021040010
7700000000021040011
9áâà8,9áâà10,9áâà11,9áâà12,9áâà18
7700000000021040012
9áâà1,9áâà2,9áâà3,9áâà4,9áâà6
7700000000021040013
9áâà9,9áâà1,9áâà2,10áâà1,10áâà2
7700000000021040014
7700000000021040015
10áâà8,10áâà9,10áâà11,10,10,11áâà1
7700000000021040016
11áâà2,11áâà3,11áâà4,11áâà5,11áâà6,12
7700000000021040017
7700000000021040018
12áâà6,14,14áâà2,16áâà1,16áâà2,16áâà3
7700000000021040019
7700000000021040020
7700000000021040021
7700000000021040022
7700000000021040023
7700000000021040024
16áâà26,16áâà27,17,17áâà1,18áâà1
7700000000021040025
7700000000021040026
7700000000021040027
18áâà12,18áâà13,18áâà14,18áâà15
7700000000021040028
18áâà16,18áâà18,18áâà19,18áâà20
7700000000021040029
7700000000021040030
18áâà25,18áâà28,19,19,19áâà2,19
7700000000021040031
7700000000021040032
20áâà6,20áâà7,20áâà8,20áâà9,20áâà10
7700000000021040033
20áâà11,20áâà12,20áâà13,20áâà14
7700000000021040034
7700000000021040035
7700000000021040036
20áâà23,20áâà24,20áâà25,20áâà1
7700000000021040037
20áâà2,20áâà3,20áâà4,21,21ª,21ª
7700000000021040038
21áâà1,21áâà4,22,22áâà1,22áâà2,23
7700000000021040039
25,26,27
7700000000021040040
25/20
7700000000021040002
12,14ª1,14ª1áâà1,14ª1áâà2,14ª3,14ª4
7700000000021050001
14ª5,16,16ª1,16ª2,18ª1,18ª2,18ª3,18ª4
7700000000021050002
20,20áâà1,22ª1,22ª1áâà1,22ª2,22ª3,22ª4
7700000000021050003
22ª4áâà1,22ª5,23ª1,23ª2,23ª3,23ª3áâà1
7700000000021050004
23ª4,23ª5,25,27/14
7700000000021050005
1/19,2áâà1,2áâà2,2áâà3,2áâà4,3,4,4áâà1
7700000000021050006
4áâà2,4áâà3,4áâà4,4áâà5,4áâà6,4áâà7,5
7700000000021050007
6,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5,6áâà6
7700000000021050008
7700000000021050009
6áâà13,6áâà14,6áâà15,7,9ª1,9ª2,11
7700000000021050010
11áâà2,13,13áâà1,13,13áâà1,15,17
7700000000021050011
1áâà1,2áâà1,3,4áâà1,5áâà2,6,7áâà1,8
7700000000021060001
9áâà1,9ª1,10áâà1,10,11áâà1,11áâà2
7700000000021060002
13áâà1,13áâà2,14áâà1,15áâà1,17áâà1
7700000000021060003
17áâà2,18áâà1,19áâà1,20,23áâà1,24
7700000000021060004
24áâà1,24áâà3,24áâà4,24áâà5,24áâà6
7700000000021060005
7700000000021060006
24áâà12,24áâà13,24áâà14,24áâà15
7700000000021060007
24áâà16,24áâà18,24áâà21,25áâà1,26áâà1
7700000000021060008
27áâà1,28áâà1,29áâà1,29áâà2,30,31áâà1
7700000000021060009
31áâà2,33,35áâà1,35áâà2,36,36áâà1
7700000000021060010
37áâà1,38áâà1,38áâà2,39áâà1,40áâà1
7700000000021060011
40áâà2,41áâà1,42áâà1,43áâà1,45áâà1
7700000000021060012
45áâà2,47áâà1,49áâà1,51áâà1,51áâà2
7700000000021060013
53áâà1,55áâà1,61áâà1,63áâà1,65áâà1
7700000000021060014
65áâà2,65áâà3,67áâà1,69áâà1,69áâà2
7700000000021060015
44,46,48_50áâà1,48_50áâà2,48_50áâà3
7700000000021080001
48_50áâà4,50áâà1,50áâà2,52áâà1,52áâà2
7700000000021080002
52,54áâà1,54áâà20,56
7700000000021080003
2/1,4,6,8áâà1,8_14áâà1,8_14áâà2,12
7700000000021080004
16/2áâà1,22/24áâà1,22/24áâà2,22/24áâà3
7700000000021080005
22/24áâà4,22_24áâà3,22_24áâà4
7700000000021080006
22_24áâà5,22_24áâà6,24áâà1,24áâà2,26
7700000000021080007
26áâà5,26áâà6,28áâà1,28áâà2,28áâà3,30
7700000000021080008
38_40,42/2
7700000000021080009
1/18,3,4,7áâà1,9,10,11,12,13/19áâà1
7700000000021090001
16/17
7700000000021090002
2/12,2/12áâà1,2áâà1,2áâà2,2áâà1
7700000000021110001
2áâà2,2áâà3,2áâà4,2áâà5,2áâà6
7700000000021110002
2áâà7,4/9,6,7áâà,8,8áâà1,8áâà2,8áâà3
7700000000021110003
7700000000021110004
9áâà2,10,11,11áâà1,11áâà3,12,13,14,15
7700000000021110005
17,17áâà1,17áâà2,18,19ª1,19ª1áâà2,19ª2
7700000000021110006
19ª2áâà1,20,21ª1,21ª1áâà1,21ª1áâà2,22
7700000000021110007
23ª1,23ª2,24,24,25,25áâà1,25áâà2,25
7700000000021110008
26,26áâà1,27,27áâà1,27áâà2,27ª2,28,29
7700000000021110009
29áâà1,29áâà2,29ª1,29ª1áâà1,29ª2,29ª3
7700000000021110010
29ª3áâà1,30ª1,30ª2,30ª2áâà1,31,31áâà1
7700000000021110011
31ª1,31ª2,31ª3,31ª3áâà9,32ª1,32ª2,32ª3
7700000000021110012
33,33ª1,33ª2,33ª3,33,34ª1,34ª2,34ª3
7700000000021110013
36,37,38,40,42,42áâà,42áâà2,42áâà3
7700000000021110014
7700000000021110015
42áâà9,42áâà10,42áâà11,42áâà12,42áâà13
7700000000021110016
42áâà14,42áâà15,42áâà16,42áâà17
7700000000021110017
42áâà18,42áâà19,42áâà20,42áâà21
7700000000021110018
42áâà22,44áâà1,44áâà2,44áâà3,44áâà4
7700000000021110019
44áâà5,44áâà6,44,44áâà1,45,46
7700000000021110020
46áâà1,46áâà2,46áâà3,46áâà4,46áâà6
7700000000021110021
7700000000021110022
46ª2,46ª2áâà2,46ª2áâà3,46ª2áâà4
7700000000021110023
46ª2áâà5,46ª2áâà6,46ª2áâà7,46ª2áâà8
7700000000021110024
46ª2áâà9,46ª2áâà10,46ª2áâà11,46ª2áâà12
7700000000021110025
46ª2áâà13,46ª2áâà14,46ª2áâà15
7700000000021110026
46ª2áâà16,46ª2áâà17,46ª2áâà18,46
7700000000021110027
47áâà2,47áâà1,47áâà2,47áâà3,47,48
7700000000021110028
48áâà,48áâà2,48áâà3,48áâà4,50áâà1
7700000000021110029
51áâà1
7700000000021110030
7700000000021110031
35áâà6,35áâà7,37áâà1,37áâà2,37áâà3
7700000000021110032
47áâà1,47áâà3,47áâà4,47áâà5,47áâà6
7700000000021110033
47áâà7,47áâà8,47_,47áâà1,47,49áâà1
7700000000021110034
49áâà2,49áâà3,49áâà4,49áâà5
7700000000021110035
2,2,4,4áâà2,6,6áâà1,6áâà2,6ª1,6
7700000000021120001
6áâà1,8,10,10áâà1,10,15áâà1,17,17
7700000000021120002
11ª5,11ª6,11ª7,12,13,14ª1,14ª2,15,15ª1
7700000000021130001
7700000000021130002
10áâà1,10áâà1,10áâà2,10áâà3
7700000000021130003
15ª2,15,16,16áâà2,16áâà6,16áâà7,17,18
7700000000021130004
18ª,18ª,18áâà2,19,19áâà1,19áâà8
7700000000021130005
19áâà9,19áâà10,19áâà19,19áâà20,22/64
7700000000021130006
23,24,24áâà2,25,25,27,27áâà4,27áâà5
7700000000021130007
27áâà6,27áâà8,27áâà9,27áâà11,27áâà13
7700000000021130008
7700000000021130009
27áâà18,27áâà19,27áâà21,27áâà1
7700000000021130010
27áâà2,27áâà3,27áâà4,27áâà5
7700000000021130011
27áâà6,27áâà7,27áâà8,27áâà9
7700000000021130012
27áâà10,27áâà11,27áâà1,27áâà2,27
7700000000021130013
30,30,30áâà2,30áâà3,30áâà4,30áâà5
7700000000021130014
32,34
7700000000021130015
33áâà2,34áâà1,34áâà2,34áâà3,34áâà4
7700000000021130016
34áâà5,34áâà6,34áâà7,34áâà8,34ª1
7700000000021130017
34ª1áâà2,34ª2,34ª3,34ª4,34áâà1
7700000000021130018
34áâà2,34áâà5,34áâà6,34áâà10
7700000000021130019
34áâà11,34áâà12,34áâà13,34áâà15
7700000000021130020
34áâà16,34áâà17,34áâà18,34áâà20
7700000000021130021
34áâà21,34áâà22,34áâà23,34áâà24
7700000000021130022
34áâà25,34áâà1,34áâà1,34áâà2
7700000000021130023
34áâà3,34áâà7,35,36
7700000000021130024
7700000000021130026
1,2,2áâà1,2áâà1,2áâà1,2áâà2
7700000000021130027
2áâà3,2áâà4,2áâà5,2áâà6,2áâà7
7700000000021130028
2áâà8,2áâà9,3,4,4áâà1,4áâà1,4áâà1
7700000000021130029
4áâà2,4áâà5,4áâà6,4áâà10,4áâà13,4áâà15
7700000000021130030
4áâà16,5áâà1
7700000000021130031
7700000000021130032
6áâà7,6áâà9,6áâà10,6áâà11,6áâà12
7700000000021130033
10,10ª1,10ª2,10áâà1,10áâà2,10áâà3
7700000000021130034
1,2,4,4ª2,5,5áâà3,5,6,6áâà1,6áâà2,7
7700000000021160001
7áâà3,9/1,11,11áâà2,16,18,19,19áâà1
7700000000021160002
20,20,26áâà1,26áâà2,28,33,35,35áâà2
7700000000021160003
36,37,37áâà2,38áâà2,38ª1,38ª2,38ª4
7700000000021160004
38ª4áâà1,38ª5,38ª6,38ª7,38ª24,40
7700000000021160005
40áâà2,42,42,49áâà1,49áâà2
7700000000021160006
56ª1,56ª2,56ª2áâà1,56ª2áâà2,58,60ª1
7700000000021160007
60ª2,62,64,66,68,69,70,70áâà1,70áâà2
7700000000021160008
72,80,80áâà1,80áâà2,80áâà3,80áâà5
7700000000021160009
80áâà6,80áâà8,80áâà12,80áâà16,80áâà19
7700000000021160010
80áâà20,81,81áâà3,89,91áâà2,91ª1,91ª2
7700000000021160011
91ª3,91ª4,91ª4áâà1,91,103,103áâà2
7700000000021160012
103áâà4,105,105áâà1,105áâà3,105ª1,105ª2
7700000000021160013
5,7,7áâà1,8áâà1,8áâà2,9,11,12,13,19
7700000000021180001
20áâà3,32
7700000000021180002
7700000000021200001
1áâà8,1áâà1,1áâà2,1áâà3,1áâà4
7700000000021200002
7700000000021200003
1áâà10,1áâà14,1,2áâà1,2áâà2,2áâà3,4
7700000000021200004
23áâà1,23áâà4,23áâà4,23áâà5,23áâà6
7700000000021210001
23áâà8
7700000000021210002
10/12
7700000000021220001
3áâà1,3áâà3,7,7áâà2,7áâà3,7áâà4,7áâà5
7700000000021220002
7áâà6,7áâà7,7áâà8,7áâà9,7áâà10,7áâà13
7700000000021220003
7áâà15,7áâà16,7áâà17,7áâà18,9,9áâà4
7700000000021220004
9áâà5,9áâà6,9áâà7,22,22áâà6,22áâà7
7700000000021220005
22ª1,22ª2,22,24áâà4,24áâà5,24áâà6
7700000000021220006
24ª1,24ª1áâà1,24ª2,24ª3,24ª3áâà1
7700000000021220007
2,3,3áâà2,8áâà1,8áâà2,8áâà3,8áâà4
7700000000021230001
8áâà5,8áâà6,8áâà7,8,8áâà1,8áâà2
7700000000021230002
15áâà1,15áâà2,15áâà3,15áâà4,15áâà4
7700000000021230003
8áâà3,8áâà4,8áâà5,8áâà6,8áâà1
7700000000021230004
8áâà2,10,10áâà1,10áâà2,10áâà3
7700000000021230005
15áâà5,15áâà6,15áâà15,15áâà16,15áâà17
7700000000021230006
15áâà18,15áâà31,15áâà33,15áâà36
7700000000021230007
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000021240001
10áâà4,10áâà5,10áâà7,10ª1,10ª3,16áâà1
7700000000021270001
16áâà2,16áâà3,16áâà4
7700000000021270002
5áâà1,7,7ª1,7ª2,18/1,20,22,22áâà2
7700000000021270003
22áâà4,22áâà5,22áâà6,22áâà7
7700000000021270004
11áâà1,11áâà2,11áâà3,24,26áâà1,26áâà2
7700000000021270005
26áâà3,28,30áâà1,30áâà2,32
7700000000021270006
áâà24,14áâà1,14áâà2,14áâà3,24
7700000000021280001
13,13áâà1,15,15áâà1,15,15,17,17,19
7700000000021280002
21,21áâà1,21,21áâà1,21áâà2,21,23
7700000000021280003
25,25,25áâà1,25áâà2,27,27
7700000000021280004
4,4ª2,5,6,8,8áâà2,8áâà3,10,12,14ª1,18
7700000000021290001
18ª1,18ª1áâà2,18ª1áâà3,20
7700000000021290002
1áâà1,1áâà2,1áâà3,2/4,2/4áâà1,2/4áâà2
7700000000021300001
119021
3áâà1,3áâà2,6áâà1,6áâà2,6áâà3,6áâà4
7700000000021300002
6áâà5,7áâà2,7áâà3,8áâà1,8áâà2,8áâà3
7700000000021300003
8áâà5,8áâà6,9,9áâà2,10áâà1,10áâà2
7700000000021300004
10áâà3,10áâà4,10áâà5,10áâà7,11áâà1
7700000000021300005
7700000000021300006
1,1áâà1,1,3,3áâà3,6áâà1,6áâà2,6áâà3,7
7700000000021310001
7700000000021320001
4,4ª1
7700000000021320002
1,1áâà2,1/3áâà2,2,3,3áâà2,3áâà3,3áâà4
7700000000021340001
3áâà5,3áâà6,3áâà7,3,5,5ª2,5ª2áâà2
7700000000021340002
5ª2áâà3,5ª3,5,6ª2,6ª3,6ª4,6ª4áâà3,6/9
7700000000021340003
7,7áâà2,9ª1,9ª2,11áâà1,11áâà1,11áâà2
7700000000021340004
7700000000021340005
7700000000021340006
11áâà13,11áâà16,11áâà17,11áâà18
7700000000021340007
11áâà19,11áâà20,11áâà24,11áâà25
7700000000021340008
11áâà32,11áâà35,11áâà40,11áâà41
7700000000021340009
11áâà43,11áâà44,11áâà47,11áâà52,15
7700000000021340010
10,12,12áâà2,12áâà3,12áâà4,13,13áâà2
7700000000021340011
14,14áâà2,15,15áâà2
7700000000021340012
1,3,7,7áâà2,9/4áâà1,9/4áâà2,11/6áâà1
7700000000021350001
11/6áâà2,13/9áâà1,15,15áâà4,17áâà1
7700000000021350002
17áâà5,17áâà7,17áâà8,19áâà1,19áâà9
7700000000021350003
21áâà2,21/16áâà9,21/16áâà12
7700000000021350004
4áâà1,4áâà3,6/2áâà1,6/2áâà8,6/2áâà10
7700000000021350005
8áâà1,8áâà2,8áâà3,8/1áâà1,8/1áâà3
7700000000021350006
8/1áâà4,8/1áâà5,8/1áâà6,8/1áâà7,10áâà1
7700000000021350007
12áâà1,14áâà18,14áâà20,16,16/4áâà2
7700000000021350008
16/4áâà3,16/4áâà4
7700000000021350009
45áâà1,45áâà3,47/7áâà1,47/7áâà2
7700000000021350010
47/7áâà4,49áâà1,51,53áâà1,53áâà2
7700000000021350011
53áâà3,53áâà4,53/4áâà4,55/3áâà1
7700000000021350012
55/3áâà2,59áâà1,59áâà2,61áâà1,61áâà2
7700000000021350013
63,65/74ª1,65/74ª3,65/74ª4,65/74ª5,67
7700000000021350014
23áâà1,23áâà2,23áâà3,25áâà1,25áâà2
7700000000021350015
25áâà3,25áâà4,27/6áâà1,27/6áâà2
7700000000021350016
27/6áâà3,27/6áâà4,27áâà3,27/8áâà1
7700000000021350017
29áâà1,29áâà1,29/10áâà2,29/10áâà3
7700000000021350018
31/12áâà1,31/12áâà2,33áâà1,33áâà2
7700000000021350019
33áâà3,35áâà1,35áâà2,37/4áâà1,37/4áâà3
7700000000021350020
39,39/22áâà1,41,43áâà1,43áâà3,43áâà4
7700000000021350021
18áâà1,18áâà2,18,20áâà2,20áâà5,20áâà7
7700000000021350022
20áâà10,22/2,24,28,30,32,34áâà1,34áâà2
7700000000021350023
34áâà3,34áâà5,34áâà6,34áâà7,34áâà8
7700000000021350024
69,69
7700000000021350025
34áâà11,34áâà12,34áâà13,34_38,36áâà1
7700000000021350026
38áâà1,40áâà1,40áâà2,40áâà3,40áâà3
7700000000021350027
40áâà4,40áâà5,40áâà7,40/37áâà1,42
7700000000021350028
44áâà1,44áâà2,44áâà4,44áâà11,46áâà1
7700000000021350029
46áâà3,46áâà4,46áâà5,48/2áâà1,50áâà1
7700000000021350030
50áâà2,52,54áâà1,54áâà2,56áâà1,56áâà2
7700000000021350031
7700000000021350032
56áâà8,56áâà9,60/2áâà1,60/2áâà3
7700000000021350033
60/2áâà4,62áâà1,64áâà1,64áâà4,66áâà1
7700000000021350034
66áâà2,68,68áâà3,70áâà1,70áâà2,72áâà1
7700000000021350035
72áâà2
7700000000021350036
4,5/17ª4,6
7700000000021360001
1,1áâà1,2/37ª2,2/37ª3,3,3,4,4áâà1,6,8
7700000000021380001
7700000000021380002
1,2/5áâà2,2/5áâà2,2/5ª1,2/5ª2,2/5ª3
7700000000021390001
2áâà1,2áâà2,2áâà3,2áâà4,3,3áâà3
7700000000021390002
3áâà4,3áâà14,3,5,6áâà1,6áâà2,6áâà3,8
7700000000021390003
7700000000021400001
9,9áâà2,11,11_,11,13,13
7700000000021410001
2,3,4,5,6,6ª2,6ª2áâà2,6ª2áâà4,6ª2áâà5
7700000000021410002
6ª2áâà6,6ª2áâà7,6ª2áâà8,8ª1,8ª2,8ª4
7700000000021410003
10ª1,10ª2,12áâà3,12ª1,12ª2,14,14áâà2
7700000000021410004
14áâà3,14áâà4,16,16áâà1,16áâà2,16áâà3
7700000000021410005
16áâà5,16áâà6,16áâà8,16áâà9,16áâà11
7700000000021410006
2,4ª1,4ª1,4ª2,4ª2áâà1,4ª2áâà2,6,8ª1
7700000000021430001
8ª2,8ª2,8ª3,11,13,15,15áâà1,15áâà3
7700000000021430002
17ª1,17ª2,19,19áâà2,21,23,23,25ª1
7700000000021430003
25ª2,25ª3,25ª4,25ª5,25ª6,25ª7,25ª8
7700000000021430004
25ª9,25ª10,27,29,29áâà1,29áâà3,29áâà4
7700000000021430005
7700000000021430006
29áâà11,29áâà12,29áâà14,29áâà18
7700000000021430007
14,14,16,16áâà1,18,18_,22,24,26
7700000000021430008
26áâà4,28,28,30,30áâà5
7700000000021430009
1,2,3,4,5,5áâà2,5áâà3,6,7,8,9,10,11,12
7700000000021450001
13,14,15,16,17,18,19,20
7700000000021450002
1,2,2áâà2,3,5
7700000000021470001
áâà53,1áâà1,1áâà2,1áâà3,1,1,3áâà1
7700000000021480001
5áâà1,5áâà3,5áâà5,5áâà6,7áâà1,7áâà2
7700000000021480002
7áâà3,7áâà4,7áâà5,7áâà6,7áâà3,7áâà4
7700000000021480003
7áâà6,7áâà7,7áâà8,7áâà9,7áâà10
7700000000021480004
7áâà11,7áâà12,7áâà13,7áâà17
7700000000021480005
7áâà18,7áâà19,7áâà20,7áâà21
7700000000021480006
7áâà22,7áâà23,7áâà24,7áâà25
7700000000021480007
7áâà26,7áâà29,7áâà30,7áâà31
7700000000021480008
7áâà33,7áâà34,7áâà35,7áâà36
7700000000021480009
7áâà37,7áâà38,7áâà39,7áâà40
7700000000021480010
7áâà50,7áâà51,10,10áâà1,13/1
7700000000021480011
13/1áâà1,14/7,19/1,21,21,23,25,26
7700000000021480012
26áâà2,28,28áâà1,29,29áâà1,29áâà3
7700000000021480013
33áâà1,33áâà2,33áâà28,33áâà28,33áâà29
7700000000021480014
33ª1,33,33,35,35áâà1,37/39,37/41
7700000000021480015
41/9,41,53,53áâà1,55,55,57
7700000000021480016
1,1áâà1,1áâà2,1áâà3,2,2áâà2,4,4áâà1
7700000000021490001
7700000000021540001
18,20,22,22,22áâà1,24,26,26áâà1
7700000000021570001
26ª2,28,28áâà2,28ª1,28ª2,28,30,30áâà1
7700000000021570003
30ª2,32,34
7700000000021570004
11áâà2,13,13áâà1,15áâà1,15áâà2,15áâà3
7700000000021570002
5,5áâà1,7,7ª1,7ª2,7ª3,7ª3áâà1,7ª4
7700000000021570005
7ª4áâà2,7ª5,7ª6,9áâà1,9áâà2,9ª1
7700000000021570006
9ª1áâà1,9ª2,9ª2áâà2,9ª3,9ª4,11áâà1
7700000000021570007
15áâà5,15áâà6,15áâà6,15áâà7,15áâà8
7700000000021570008
15áâà9,15áâà9,15áâà10,15áâà11,15áâà12
7700000000021570009
15áâà13,15áâà14,15áâà16,15áâà17
7700000000021570010
7700000000021570011
15áâà23,15áâà26,15áâà27,15áâà29
7700000000021570012
15áâà30,15áâà32,15áâà34,15áâà35
7700000000021570013
15áâà36,15áâà37,15áâà38,15áâà40
7700000000021570014
15áâà42,15áâà43,15áâà45,15áâà46
7700000000021570015
15áâà47,15áâà48,15áâà49,15áâà50,17
7700000000021570016
17áâà2,19,21,21áâà1,21áâà2,23,23áâà1
7700000000021570017
3,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5,4áâà6
7700000000021570020
4áâà7,4áâà13,4,8,10,12,14áâà1,14áâà2
7700000000021570021
7700000000021570022
7700000000021570023
14áâà17,14áâà18,14áâà19,14áâà31
7700000000021570024
14áâà34,14áâà43,14áâà50,14áâà53
7700000000021570025
14áâà54,14ª1áâà1,14ª1áâà2,14ª1áâà3
7700000000021570026
14ª1áâà4,16,16áâà2
7700000000021570027
4,6,6áâà2,8,8áâà2,8áâà3
7700000000021580001
5ª3,5ª3áâà1,7,9,9áâà1,9ª1,9ª1áâà1,9ª2
7700000000021600001
5,5áâà1,5áâà2,5áâà3,5ª1,5ª1áâà1,5ª2
7700000000021600002
9ª2áâà1,9ª3,9ª3áâà1,9ª5,9ª5áâà2
7700000000021600003
18ª4,18ª5,18,20,22ª1,22ª2,22ª2áâà1
7700000000021600004
117321
31,31áâà2,33,33áâà1,33áâà2,33áâà3,33
7700000000021600005
35,35áâà1,35áâà2,35,37,37
7700000000021600007
16ª2,16ª3,16ª4,16ª5,16ª5áâà2,18,18ª1
7700000000021600008
18ª1áâà1,18ª2,18ª2áâà1,18ª3,18ª3áâà1
7700000000021600010
28áâà2,28ª1,30ª1,30ª2,30ª2áâà1,30
7700000000021600011
13,15áâà1,15ª1,15ª1áâà1,19áâà1,19/22
7700000000021600013
21,21áâà1,21áâà2,21,23ª1,23ª2
7700000000021600014
39,39áâà1,39áâà3,41,41ª1,41ª1áâà1,41ª2
7700000000021600015
41,43,43ª1,43ª2,43,45ª1,45ª1áâà1
7700000000021600016
45ª2,45ª2áâà1,45ª2áâà2,45ª3,45
7700000000021600017
45áâà1,47,47áâà1,47áâà3,49,51,53,53ª1
7700000000021600018
53ª1áâà1,53ª2,53ª3,53ª4,53ª5
7700000000021600019
7700000000021600006
23ª2áâà1,23ª2áâà3,23ª3,23,25,25áâà1
7700000000021600020
25ª1,27áâà1,27ª1,27ª1áâà1,27ª1áâà2
7700000000021600021
27ª2,27ª3,27,29/120
7700000000021600022
8áâà1,10áâà1,10áâà2,10áâà3,10áâà4
7700000000021600023
10áâà5,10áâà7,10/1,14,14áâà1,14áâà2
7700000000021600024
24ª1,26ª1,26ª2,26ª2áâà1,26ª2áâà2
7700000000021600009
9ª4,9ª4áâà1,9ª4áâà2,11,11ª1,11ª1áâà1
7700000000021600012
7700000000021600025
1áâà6,1áâà7,1áâà7,1áâà8,1áâà9
7700000000021600026
2,2áâà1,2áâà2,2áâà3,4,4áâà1,6,6áâà1,8
7700000000021600027
32,32,34áâà1,34ª1,34ª1áâà1,34ª2
7700000000021600029
34ª2áâà2,36
7700000000021600030
42,42áâà1
7700000000021600031
1áâà1,1áâà2,1ª1,1ª2,1ª2áâà3,7,10ª2
7700000000021630001
10ª3,11ª1,11ª2,11ª3,12,12ª1,12ª2,12
7700000000021630002
13,15,17,19,19áâà1,21,21áâà1,23/2,23
7700000000021630003
1,1/10,1/10áâà1,1/3,1,1,1
7700000000021640001
3,3áâà2,3áâà5,5,6,6áâà2,7,7áâà3,8,9
7700000000021650001
9áâà2,9áâà3,9áâà4,9,11,11áâà1,15
7700000000021650002
15áâà2
7700000000021650003
17ª1,17ª1áâà2,17ª1áâà3,17ª2,17ª2áâà1
7700000000021670001
17ª3,17ª4,17ª5,17ª6,17ª6áâà1,17ª7,17ª8
7700000000021670002
17ª9,17ª10,17ª11,17ª12,17ª13,17áâà1
7700000000021670003
19,19ª1,19ª2,19ª2áâà1,19ª3,19ª4,19ª5
7700000000021670004
19ª6,19,21áâà15,21áâà15,21ª1,21ª2
7700000000021670005
21ª3,21ª4,21ª5,21ª6,21ª7,21ª8,21ª9
7700000000021670006
21ª9áâà1,21ª10,21ª11,21ª12,21ª12áâà2
7700000000021670007
21ª13,21ª13áâà1,21ª14,21ª15,21áâà1
7700000000021670008
21áâà1,21áâà2,23,23ª1,23ª1áâà1,23ª2
7700000000021670009
23ª3,23ª4,23ª4áâà1,23ª4áâà2,23ª5,23ª6
7700000000021670010
23ª6áâà2,23ª7,23,23áâà2,23,24,24ª2
7700000000021670011
24ª2áâà1,24ª3,24ª3áâà1,24ª5,24ª5
7700000000021670012
24ª5,24ª5,24ª6,24ª6áâà1,24ª7,24ª8
7700000000021670013
24ª8áâà1,24ª9,24ª9áâà1,24ª11,24ª12
7700000000021670014
24ª13,24ª14,24ª14áâà1,24ª14áâà2,24ª27
7700000000021670015
24ª35,24ª36,24ª37,24ª41,24ª42,24ª48
7700000000021670016
24ª62,24,24áâà2,24áâà3,24áâà1
7700000000021670017
24áâà2,24áâà1,24áâà2,24áâà1,25
7700000000021670018
25ª1,25ª2,25ª3,25ª4,25ª5,25ª6,25ª7
7700000000021670019
25ª8,25ª9,25ª10,25ª11,25ª12,25ª13
7700000000021670020
25ª14,25ª15,25ª16,25ª16áâà1,26ª1,26ª2
7700000000021670021
26ª4,26ª5,26ª9,26ª10,26ª10áâà1,26ª12
7700000000021670022
26ª12,26áâà1,26,27,27ª1,27ª2,27ª3
7700000000021670023
27ª4,27ª5,27ª6,27ª7,27ª8,27ª8áâà1,27ª9
7700000000021670024
28,28áâà2,28áâà3,28áâà4,28ª1,28ª2,28ª3
7700000000021670025
28ª3áâà1,28ª3áâà2,28ª3áâà3,28ª4,28ª6
7700000000021670027
28ª6,28ª6áâà1,28ª7,28ª8,28ª9,28ª10
7700000000021670028
28ª11,29,29ª1,29ª2,29ª3,29ª4,29ª4áâà1
7700000000021670029
29ª5,29ª6,29ª7,29ª8,29ª9,29ª9áâà1
7700000000021670030
29ª10,29ª11,29ª12,29
7700000000021670031
1ª2,1ª3,1ª4,1ª5,1ª7,1ª8,1ª9,1ª10,1ª11
7700000000021670032
1ª12,1ª17,1ª17áâà1,1áâà1,1áâà1,3
7700000000021670033
3áâà4,3áâà5,3ª1,3ª4,3ª5,3ª6,3ª7,3ª9
7700000000021670034
3ª10,3ª11,3ª12,3ª13,5,5áâà4,5áâà15,5ª1
7700000000021670035
5ª2,5ª3,5ª4,5ª5,5ª6,5ª7,5ª8,5ª9,5ª10
7700000000021670036
5ª11,5ª12,5ª13,5,5áâà1,5áâà1,6,6ª1
7700000000021670037
6ª2,6ª3,6ª4,6ª5,6ª6,6ª7,6ª8,6ª9,6ª10
7700000000021670038
6ª12,8,8áâà1,9áâà1,9áâà1,9áâà2,9áâà3
7700000000021670039
7700000000021670040
9áâà10,9áâà11,9áâà12,9áâà14,9áâà14
7700000000021670041
9áâà15,10,10áâà1,12áâà1,12áâà2,12áâà3
7700000000021670042
12áâà4,12áâà5,12áâà7,12áâà9,12áâà10
7700000000021670043
12áâà11,12áâà13,12áâà14,12áâà17
7700000000021670044
12áâà19,12áâà20,12áâà21,12áâà22
7700000000021670045
12áâà23,12áâà24,12áâà25,12áâà27
7700000000021670046
12áâà28,12áâà29,12áâà30,12áâà31
7700000000021670047
12áâà33,12áâà34,12áâà35,12áâà36
7700000000021670048
12áâà38,12áâà39,12áâà41,12áâà42,14
7700000000021670049
16áâà7,16áâà1,16áâà2,16áâà3,16
7700000000021670050
14áâà3,14áâà4,14áâà5,14áâà6
7700000000021670051
14áâà7,14áâà8,14áâà9,14áâà10
7700000000021670052
14áâà11,14áâà12,16áâà1,16áâà2
7700000000021670053
7áâà1,7áâà2,7áâà3,11áâà1,11áâà2
7700000000021670054
11áâà3,13áâà1,13áâà2,13áâà3,13áâà4
7700000000021670055
13áâà5,13áâà6,13áâà8,13áâà12,13áâà13
7700000000021670056
13áâà14,14áâà1,15áâà1,15áâà2,15áâà3
7700000000021670057
7700000000021670058
7700000000021670059
7700000000021670060
7700000000021670061
15áâà22,15áâà24,15áâà42,15áâà43,16
7700000000021670062
7700000000021670063
7700000000021670064
16áâà11,16áâà12,16áâà13,16áâà14
7700000000021670065
16áâà15,16áâà16,16áâà17,16áâà18
7700000000021670066
16áâà19,16áâà20,16áâà21,16áâà21
7700000000021670067
7700000000021670068
16áâà26,16áâà27,16áâà28,16áâà29
7700000000021670069
16áâà30,16áâà31,16áâà32,16áâà33,16
7700000000021670070
16áâà2,16áâà3,16áâà4,18áâà1,18áâà2
7700000000021670071
48ª2,48ª3,48ª4,48ª5,48ª6
7700000000021670072
7700000000021670073
18áâà9,18áâà10,18áâà1,18áâà2
7700000000021670074
18áâà3,18áâà4,18áâà5,18áâà6
7700000000021670075
18áâà7,18áâà8,18áâà9,18áâà10
7700000000021670076
18áâà11,18áâà12,18áâà13,18áâà14
7700000000021670077
18áâà15,18áâà16,18áâà17,18,18áâà2
7700000000021670078
18áâà3,18áâà4,20áâà1,20áâà2,20áâà4
7700000000021670079
20áâà5,20áâà6,20áâà7,20áâà8,20áâà9
7700000000021670080
16áâà3,16áâà4,16áâà5,16áâà6
7700000000021670081
20áâà10,20áâà11,20áâà12,20áâà13
7700000000021670082
2ª1,2ª2,2ª3,2ª3áâà1,2ª4,2ª5,2ª6
7700000000021670083
2ª6áâà1,2ª7,2ª8,2ª9,2ª9,2ª10,2ª12
7700000000021670084
4áâà1,4,6ª10,6ª11,6ª11áâà1,6ª13
7700000000021670085
6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000021670086
7700000000021670087
7700000000021670088
1,1áâà1,1,1,2,2,2áâà1,2áâà2
7700000000021680001
2áâà3,2áâà4,2áâà5,2áâà6,2áâà7,3
7700000000021680002
3,4,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000021680003
7700000000021680004
5,5áâà1,5,5,6,7,7áâà1,8,9,10,10áâà1
7700000000021680005
10áâà2,10áâà3,11,11áâà1,11,11,11
7700000000021680006
11,12,13,13,13,14,14,14,15,15
7700000000021680007
15,15,16,16,16áâà1,16,16áâà1
7700000000021680008
16áâà2,16,17,18,18ª1,18ª1áâà1,18
7700000000021680009
18áâà1,18,18,18,20
7700000000021680010
1,2,2,3,3,3,4,4áâà1,4,4áâà1,5
7700000000021690001
5áâà1,5áâà2,6,8,8áâà1,9ª2,10,10áâà1,11
7700000000021690002
3,6,6áâà2,8,10/12áâà17,10/12ª1,10/12ª2
7700000000021700001
10/12ª2áâà1,10/12ª3,10/12ª4,10/12ª5
7700000000021700002
10/12ª6
7700000000021700003
1,3,5,9,11,13,15,17,19
7700000000021710001
1,3,4,5,6,8
7700000000021720001
7700000000021730001
7700000000021730002
2áâà7,2áâà11,2áâà13,2áâà21,2áâà22
7700000000021730003
2áâà23,2áâà24,2áâà25,2ª2áâà1,2ª2áâà2
7700000000021730004
2ª2áâà3,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000021730005
7700000000021730006
7700000000021730007
7700000000021730008
4áâà7,4áâà8,4áâà9,4áâà10,4áâà11,4áâà12
7700000000021730009
4áâà13,4áâà14,4áâà15,4áâà17,4áâà17
7700000000021730010
4áâà19,4áâà20,4áâà21,4áâà23,4áâà24
7700000000021730011
4áâà25,4áâà26,4áâà27,4áâà28,4áâà30
7700000000021730012
4áâà31,5,5áâà1,5áâà2,6áâà1,6áâà2,7
7700000000021730013
8,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5,9,10
7700000000021730014
10áâà1,11,11áâà1,14,15,15áâà1,16,16
7700000000021730015
17,17áâà1,18,19,20,21,21_,22,23/8,24
7700000000021730016
24áâà,25,25áâà1,25,26,27,28,28áâà1
7700000000021730017
29,30,30áâà1,30áâà2,31,32,32áâà3,33,34
7700000000021730018
35,35,36,37,37áâà2,38,38áâà2,38_
7700000000021730019
39ª1,39ª2,39ª2áâà14,39ª3,40,40áâà2
7700000000021730020
40áâà4,40áâà11,40áâà12,40áâà13,40áâà14
7700000000021730021
40áâà17,40áâà18,41,42,42áâà1,42áâà2
7700000000021730022
42ª1,42ª1áâà1,42ª1áâà2,42ª2,43,44
7700000000021730023
44áâà2,44áâà3,45ª1,45ª2,45ª2áâà1,46,47
7700000000021730024
47áâà1,47áâà2,47áâà3,47áâà4
7700000000021730025
47áâà5,47
7700000000021730026
1,2,2áâà2,3,3áâà1,3áâà2,3áâà3,4,5áâà1
7700000000021740001
5áâà2,5áâà3,7,7áâà5,8,9,10,11áâà1
7700000000021740002
11áâà2,11áâà3,12/22,13/31,13/31áâà1,14
7700000000021740003
14áâà3,16áâà1,16áâà9,17áâà1,17,18áâà2
7700000000021740004
20,21,22,23áâà1,23áâà3,24áâà1,24áâà2
7700000000021740005
25áâà1,25áâà2,25áâà3,25áâà5,25áâà25
7700000000021740006
26áâà1,27,28,29,29áâà1,29áâà4,30
7700000000021740007
31/17áâà1,31/17áâà2,32/29áâà1
7700000000021740008
32/29áâà2,33/22,34/32,34/32áâà2,35
7700000000021740009
35áâà6,36áâà1,37,37áâà5,38,38,39,40
7700000000021740010
40áâà2,40áâà18,41,41áâà8,44áâà1,44áâà2
7700000000021740011
46,46áâà11,48,50,52áâà1,52áâà6,54áâà1
7700000000021740012
56/15áâà7,60_64áâà1,60_64áâà2
7700000000021740014
60_64áâà3,60_64áâà4,60_64áâà5
7700000000021740015
60_64áâà6,60_64áâà21,66,68,70
7700000000021740016
1,1áâà1,1áâà2,1áâà3,3,3áâà1,3áâà2,4
7700000000021750001
7700000000021760001
1,1áâà1,3,6,6áâà1,6áâà2
7700000000021770001
3,3áâà1,3áâà2,4
7700000000021780001
7700000000021790001
2ª1,2ª2,2ª3,2ª4,2ª4áâà1,2,2áâà1,2
7700000000021810001
2áâà1,2áâà2,2áâà3,3áâà1,3áâà2,3áâà3
7700000000021810002
7700000000021810003
3áâà10,3áâà11,3áâà12,3_áâà1,3_áâà2
7700000000021810004
3_áâà3,3_áâà4,3_áâà5,3_áâà6
7700000000021810005
3_áâà7,3_áâà8,3_áâà9,3_áâà10
7700000000021810006
3_áâà11,3_áâà12,3_áâà13,3_áâà14
7700000000021810007
3_áâà15,3_áâà16,3_áâà17,3_áâà18
7700000000021810008
3_áâà19,3_áâà20,3_áâà21,3_áâà22
7700000000021810009
3_áâà23,3_áâà24,3_áâà25,3_áâà26
7700000000021810010
3_áâà27,3_áâà28,3_áâà29,3_áâà30
7700000000021810011
3_áâà31,3_áâà32,3_áâà33,3_áâà34
7700000000021810012
3_áâà35,3_áâà36,3_áâà37,3_áâà38
7700000000021810013
3_áâà39,3_áâà40,4ª1,4ª1áâà2,4ª2,4ª3
7700000000021810014
4ª3,4ª3áâà1,4ª4,4ª5,5,5áâà1,5áâà2
7700000000021810015
7700000000021810016
5áâà8,5áâà9,5áâà10,5áâà11,5áâà12
7700000000021810017
5áâà13,5áâà14,5áâà15,5áâà16
7700000000021810018
5áâà17,5áâà19,5áâà20,5áâà21
7700000000021810019
5áâà22,5áâà23,5áâà24,5áâà25
7700000000021810020
5áâà26,5áâà27,5áâà28,5áâà29
7700000000021810021
5áâà30,5áâà31,5áâà32,5áâà33
7700000000021810022
5áâà34,5áâà35,5áâà36,5áâà37
7700000000021810023
5áâà38,5áâà39,5áâà40,5áâà41
7700000000021810024
5áâà42,5áâà43,5áâà44,5áâà45
7700000000021810025
5áâà46,5áâà47,5áâà48,6ª1,6ª2
7700000000021810026
6ª2áâà1,6ª3,6ª4,8ª1,8ª2,8ª3,8ª4,8ª5
7700000000021810027
8ª5,8ª6,8ª7,9,10ª1,10ª1áâà2,10ª1áâà3
7700000000021810028
10ª2áâà1,10ª2áâà2,10ª2áâà3,10ª2áâà4
7700000000021810029
10ª2áâà5,11áâà2,11ª1,12áâà1,12áâà2
7700000000021810030
12áâà4,12áâà5,12áâà6,12áâà7,13ª1,13ª2
7700000000021810031
14,14áâà2,14áâà3,14áâà4,14áâà5,14áâà6
7700000000021810032
7700000000021810033
14áâà12,15ª1,15ª2,15ª3,16áâà1,16áâà2
7700000000021810034
16áâà3,16áâà4,16áâà5,16áâà8,16áâà9
7700000000021810035
17ª1,17ª1áâà4,17ª2,17ª2áâà1,17ª3,18
7700000000021810036
18áâà,18áâà,18áâà,18áâà1,18áâà3
7700000000021810037
18áâà4,18áâà5,18áâà6,18,18áâà1
7700000000021810038
18áâà2,19ª1,19ª2,20áâà1,20áâà2,21ª1
7700000000021810039
21ª2,21ª3,22áâà1,22áâà2,22áâà3,22áâà4
7700000000021810040
22áâà5,22áâà6,22áâà7,22,23,26,26áâà1
7700000000021810041
28áâà1,28áâà2,28áâà3,28áâà4,30áâà1
7700000000021810042
30áâà2,30áâà3,30áâà4,32,32áâà2,32áâà3
7700000000021810043
7700000000021810044
32áâà9,32áâà10,32áâà11,32áâà12,32áâà13
7700000000021810045
32áâà14,32áâà15,32áâà16,32áâà17
7700000000021810046
32áâà18,32áâà19,32áâà20,32áâà21
7700000000021810047
32áâà22,32áâà23,32áâà24,32áâà25
7700000000021810048
32áâà26,32áâà27,32áâà28,32áâà29
7700000000021810049
32áâà30,32áâà31,32áâà32,32áâà33,36
7700000000021810050
7700000000021810051
7700000000021810052
40áâà6,40áâà7,40áâà8,40áâà9,42áâà
7700000000021810053
7700000000021810054
7700000000021810055
42áâà11,42áâà12,42áâà13,42áâà14
7700000000021810056
42áâà15,42áâà16,42áâà17,42áâà19
7700000000021810057
42áâà20,42áâà21,44,44áâà1,46,46áâà1
7700000000021810058
7700000000021820001
7700000000021820002
2áâà13,2áâà15,2áâà16,2áâà18,2áâà21,4
7700000000021820003
4áâà3,6,6áâà2,6áâà3,6áâà4,6áâà5,6áâà6
7700000000021820004
6áâà9,6áâà14,6áâà15,8,8áâà2,8áâà6
7700000000021820005
8áâà9,8áâà10,8áâà12,8áâà13,8áâà14
7700000000021820006
8áâà16,8áâà17,8áâà19,8áâà20,8áâà21
7700000000021820007
8áâà22,8áâà24,8áâà25,8áâà26,8áâà27
7700000000021820008
8áâà30,8áâà43,8áâà44,8áâà45,8áâà46
7700000000021820009
8áâà47,8,10ª1,10ª2,10ª3
7700000000021820010
1,1áâà1,1/42ª1,1/42ª2,1
7700000000021840001
3,3áâà2,3áâà3,3áâà4,3áâà5,3áâà6,3áâà7
7700000000021850001
4,4ª1,4ª1áâà2,4ª1áâà3,4ª2,4ª2áâà2,4ª3
7700000000021850002
4ª4,4,4,4,5áâà1,5áâà2,5áâà3,6,7
7700000000021850003
7700000000021850004
7áâà7,7áâà8,7áâà9,7áâà10,7áâà13,7áâà14
7700000000021850005
2,2ª3,4,4,5,6ª,6ª,6ª,6ª,7ª1,7ª2
7700000000021860001
7ª2áâà2,7ª3,7ª4,7,9,9,10áâà1
7700000000021860002
10áâà2,10áâà3,11,11
7700000000021860003
1,2,4,4áâà2,4áâà3,4áâà4,5/2,6,7,7ª2
7700000000021870001
7ª2áâà2,7ª2áâà3,8ª1,8ª2,8ª3,8ª3áâà2
7700000000021870002
9ª1,9ª1áâà3,9ª2,10,10áâà2,11ª1,11ª2
7700000000021870003
12ª1,12ª2,12ª3,13,14,14ª2,15áâà1
7700000000021870004
15áâà2,15áâà3,15áâà15,15áâà16,16
7700000000021870005
19áâà1,19áâà2,19áâà3,19áâà4,19áâà6
7700000000021870006
21áâà3,21ª1,21ª2,21ª2áâà4,23,23áâà2,25
7700000000021870007
27áâà5,27áâà6,27ª1,27ª2,27ª3,27ª4
7700000000021870008
22,26,28,30,32,34,36áâà1,36áâà2,38
7700000000021870009
40ª1,40ª2,42áâà3,42ª1,42ª2,44,46
7700000000021870010
46áâà2,48,50,50áâà2,54,56
7700000000021870011
6,7,7áâà4,8,8áâà2,8,8ª1,8,17,18
7700000000021880001
18áâà2,21,23,25,25áâà1,25áâà2,25áâà3
7700000000021880002
7700000000021880003
25áâà9,25áâà10,25áâà11,25áâà12,25áâà13
7700000000021880004
7700000000021880005
25áâà18,25áâà19,25áâà20,25áâà21
7700000000021880006
25áâà22,25áâà23,25áâà24,25áâà25
7700000000021880007
25áâà26,25áâà27,25áâà28,25áâà29
7700000000021880008
25áâà30,25áâà31,25áâà32,25áâà33
7700000000021880009
25áâà34,25áâà36,25áâà42,25,27,27áâà1
7700000000021880010
7700000000021880011
27áâà8,27áâà9,27áâà10
7700000000021880012
3,5,5áâà2,7
7700000000021890001
1,3,3áâà2,13,15,18,20,20áâà2,20áâà3
7700000000021900001
1,2,2áâà1,2áâà2,2áâà3,10,12,14,20,22,28
7700000000021910001
2,3,4,5,6,7,8,9_11,10,12,13,13áâà1
7700000000021920001
13áâà2,14,15,16,16ª1,17,18,19,20,21,22
7700000000021920002
23áâà1,23áâà2,24,25,26áâà1,26áâà2,27,28
7700000000021920003
1,2/3,3/5,4,6áâà1,6áâà11,7,8,9,10,11
7700000000021930001
13,15,16,17,18,19,20,21,22,23,24
7700000000021930002
24áâà2,25áâà1,25áâà2,25áâà3,26,28,29
7700000000021930003
30,30áâà2
7700000000021930004
1/5,2,3,4,5,6,7,8/1,9,11,13,13áâà2,14
7700000000021940001
15,16,17,18,19,20/2,21,22,23,25,27
7700000000021940002
1,2,2,3,4,5,5,6,7,7,8,9,11
7700000000021950001
2/8,3,4,5,6,7,7áâà5
7700000000021960001
2,4,5,5áâà2,5ª2,5ª2áâà1,6,7,8,9ª1,9ª2
7700000000021970001
9ª3,9ª3áâà1,10,11,11ª2,11ª2áâà1
7700000000021970002
11ª2áâà2,12,13,14,15,15,16ª1,16ª2,17
7700000000021970003
17áâà2,17áâà3,19ª1,19ª2,21,21áâà1
7700000000021970004
7700000000021970005
120,122ª1,122ª2,124ª1,124ª2,126,128ª1
7700000000021970006
128ª2,131,131áâà1,131áâà3,131,133,135
7700000000021970007
137,143,145,147,147ª1,147ª1áâà1
7700000000021970008
147ª1áâà2,147ª1áâà3
7700000000021970009
1,3,3áâà1,4,4áâà1,4áâà2,4áâà3,5,5áâà
7700000000021990001
5áâà1,5áâà2,5,6,7,7áâà1
7700000000021990002
3,5ª1,5ª1áâà2,5ª2,7áâà1,7ª1,7ª1áâà2
7700000000022010001
7ª2,9,11
7700000000022010002
4ª1,4ª2,4ª3,4ª4,6,6ª2,8,8ª1,8ª2,10,12
7700000000022010003
12áâà2,14,14,16ª1,16ª2,16ª2áâà1,16ª3
7700000000022010004
16ª4,18,20
7700000000022010005
2áâà2,2ª1,2ª2,2ª3,2ª4,2áâà1,3áâà1
7700000000022020001
3áâà1,3áâà2,4ª1,4ª2,4ª2áâà2,4ª3,6,6
7700000000022020002
8,9áâà1,10,11áâà1,11áâà2,12,12áâà5,14
7700000000022020003
16,16áâà2,18ª1,18ª1,18ª2,18ª3,18
7700000000022020004
7700000000022020005
1/16áâà1,1/16áâà2,2,3,3áâà2,4áâà1,5,6
7700000000022040001
7700000000022060001
1/51,4,5_7,5,7,7ª2,7ª2áâà1,8,9ª2
7700000000022070001
9ª3,10,10áâà1,10áâà2,10áâà3,11,11áâà1
7700000000022070002
7700000000022080001
13/53,15,15áâà2,15,17,17áâà2,18
7700000000022080002
18áâà2,18,20,20áâà1
7700000000022080003
24,26,32áâà2,32áâà7,32áâà8,32áâà9
7700000000022090001
32áâà11,32áâà12,32áâà13,32áâà14
7700000000022090003
32áâà15,32áâà16,32áâà18,32ª1,32ª2,32ª3
7700000000022090004
32ª4,34,34,36,36áâà2,36áâà3,36áâà4,38
7700000000022090005
7700000000022090006
19,21,25
7700000000022090002
2áâà1,2áâà2,6,8,8áâà2,8áâà3,10,14
7700000000022090007
42ª1,42ª1áâà1,42ª2,42ª2áâà1,44ª1,44ª2
7700000000022090008
105215
44ª3,44ª3áâà1,44ª4,44,46,48ª1,48ª2
7700000000022090009
48ª3,48,49,49áâà3,50,52ª1,52ª2,52ª3
7700000000022090010
52ª4,52ª4áâà1,52ª4áâà2,52ª5,53,53
7700000000022090011
54áâà3,54ª1,54ª2,54ª2áâà1,54ª3,55
7700000000022090012
55áâà2,57ª1,57ª2,57ª3,57ª4
7700000000022090013
29,31,37áâà4,37áâà5,37ª1,37ª2,37ª3
7700000000022090014
39ª1,39ª2,41ª1,41ª2
7700000000022090015
1/89ª1,1/89ª2,3áâà3,3ª1,3ª2,5ª1,5,7
7700000000022090016
7áâà2,9/35,9/35áâà2,9/35áâà3
7700000000022090017
4,5,5áâà1,6,7,7áâà2,11,13,13áâà9
7700000000022100001
8áâà2,8/25,11,14,16áâà7,16áâà9,16áâà14
7700000000022110001
16ª1,16ª2,16ª3,16ª3áâà8,16ª4,16ª5,16ª6
7700000000022110003
17,18,18,19,20áâà5,20áâà6,20áâà7,20ª1
7700000000022110004
20ª2,20ª3,20ª4,21,21,22ª4
7700000000022110005
7700000000022110002
25ª1,25ª2,25ª2áâà2,27ª1,27ª2,27ª3,27ª4
7700000000022110006
29,31ª1,31ª2,31ª3,33,35ª1,35ª2,35ª3
7700000000022110007
35ª4,35ª5,37ª1,37ª2,37ª2áâà1,37ª2áâà2
7700000000022110008
37ª3
7700000000022110009
24/51,26,26áâà1,26áâà2,26ª3,26áâà5
7700000000022110010
105484
28áâà9,28ª2,28ª2áâà1,28ª2áâà2,28ª3
7700000000022110011
28áâà1,30,30ª1,32
7700000000022110012
34ª1,34ª1áâà1,34ª2,36,36áâà2,38ª2,38ª3
7700000000022110013
105523
40,40ª3áâà1,42,42áâà1,42áâà2
7700000000022110014
1,3,3,4,4,4áâà1,4,5,6,6,8
7700000000022120001
18áâà3,18áâà4,18áâà5,18áâà6,18ª1,18ª2
7700000000022130001
20,20,22,23,23,27,29áâà9,29ª1,29ª2
7700000000022130002
29ª3,29ª4,29ª5,31,33áâà5,33ª1,33ª2
7700000000022130003
33ª3,33ª4
7700000000022130004
1/123ª2,3,3,5,6,6/75,8,8áâà3,10,10
7700000000022130005
16ª1,16ª2,16ª3,16,19
7700000000022130006
24ª1,24ª2,24,26áâà2,26ª1,26ª2,26ª3
7700000000022130007
26ª4,28,28áâà2
7700000000022130008
36/63ª2,36/63ª2áâà1,37,37áâà1,38
7700000000022130009
38áâà1,38áâà3,39,39áâà1,39áâà2,39ª3
7700000000022130010
41ª1,41ª2,41ª2áâà1,41
7700000000022130011
40,40áâà1,40ª1,40ª2,40ª3,40ª3áâà1,40ª4
7700000000022130012
40ª5,40ª5áâà9,40,40,42áâà13,42ª1
7700000000022130013
42ª2,42ª3,42ª4,42ª5,42ª5áâà2,42ª6,42ª7
7700000000022130014
42ª8,42ª8áâà1,42ª9,42ª10,43,44ª1,44
7700000000022130015
45,46ª1,46ª2,46ª3,46ª4,46ª5,46ª6
7700000000022130016
46ª6áâà1,46ª7,46ª8,46ª9,46ª10,46,47ª1
7700000000022130017
47ª1áâà1,47ª1áâà2,47ª3,47ª3áâà1,47ª4
7700000000022130018
47ª5,48,48áâà1,48áâà2,48ª1,48ª2,49
7700000000022130019
49áâà1,49ª2áâà1,49ª2áâà2,50,50áâà1,51
7700000000022130020
52ª1,52ª2,52,54,56,56áâà2,58,60
7700000000022130021
2,2ª1,3,5,5áâà3,7,11,11áâà4,13,17áâà1
7700000000022140001
17áâà2,17áâà3,17áâà4,17áâà4,17áâà5
7700000000022140002
17áâà6,17áâà7,17áâà9,17áâà10,17áâà11
7700000000022140003
4,4áâà2,4áâà3,4áâà4,6,8,10,10ª2,12,14
7700000000022140004
16,16áâà2,16áâà6,16ª1,16ª2,16ª3
7700000000022140005
16ª3áâà1,16ª3áâà5,18,18áâà1,19áâà4
7700000000022140006
19áâà5,19ª1,19ª2,19ª3,21áâà4,21ª1,21ª2
7700000000022140007
23,25ª1,25ª1áâà1,25ª2,27,29áâà5,29ª1
7700000000022140008
7700000000022140009
20,20áâà3,20áâà2,20áâà4,20áâà5
7700000000022140010
20áâà6,20áâà7,20áâà8,20áâà9
7700000000022140011
20áâà10,22áâà1,22áâà2,22áâà3,22áâà4
7700000000022140012
22áâà7,22áâà8,22áâà1,26ª1,26ª2,26ª3
7700000000022140013
26ª4,26ª5,30,30áâà2,30áâà3,30áâà4
7700000000022140014
30áâà6,30áâà7,30áâà8,32,32áâà2,32áâà3
7700000000022140015
7700000000022140016
7700000000022140017
32áâà19,32áâà20,32áâà23,32áâà24,34áâà1
7700000000022140018
34áâà2,34áâà3,34áâà4,34áâà5,34áâà6
7700000000022140019
34áâà8,34áâà9,34áâà10,35,36áâà1,36áâà2
7700000000022140020
36áâà3,36áâà4,36áâà5,36áâà6,36,37
7700000000022140021
37áâà1,37áâà3,37ª1
7700000000022140022
2,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6
7700000000022140023
2áâà7,2áâà8,2áâà11,2áâà12,2áâà14
7700000000022140024
2áâà15,2áâà16,2áâà17,2áâà19
7700000000022140025
2áâà20,2áâà21,2áâà22,2áâà102
7700000000022140026
39,39áâà1,41,43,43áâà1,43ª1,43ª2,45,47
7700000000022140027
49áâà1,49ª1,49ª2,51,53,53áâà1,55áâà3
7700000000022140028
55ª1,55ª2
7700000000022140029
4,6/8,6/8áâà2,9,11,12,12áâà2,13,13áâà2
7700000000022150001
14,16,18,25,28,28áâà2
7700000000022150002
7/17,9,13,13áâà2,25,25áâà3,27,27áâà2
7700000000022160001
29,29áâà2,29,31/16,31áâà1,33
7700000000022160002
4,6,8/19,10,12,14ª1,14ª2,14,20,20áâà2
7700000000022160003
20áâà3,22,22,26/2,26/2áâà2
7700000000022160004
30,34,34,36ª1,36ª2,36ª3,36ª4
7700000000022160005
35,37,37,38,38áâà3,38ª1,39áâà6,39ª1
7700000000022160006
39ª2,39ª3,39ª4,39ª5,41,41áâà1,41
7700000000022160007
41áâà1,41áâà3,41áâà4,41áâà7
7700000000022160008
41áâà8,41áâà9,41áâà10,41áâà12
7700000000022160009
41áâà13,41áâà15,41áâà16,41áâà18
7700000000022160010
41áâà31,41áâà32,41áâà37,41
7700000000022160011
51áâà3,51áâà4,51áâà5
7700000000022160012
40,42áâà2,42áâà4,42ª1,42ª2,42ª3,42
7700000000022160014
44ª1,44ª2,44,44áâà1,44,44áâà1
7700000000022160015
46áâà7,46ª1,46ª2,46ª3,46ª4,46ª5,46ª6
7700000000022160016
46,48,48áâà1,48ª2,50áâà4,50ª1,50ª2
7700000000022160017
50ª3,50,52ª1,52ª2,53áâà1,54áâà3,54ª1
7700000000022160018
61áâà1,61,63,63áâà1,63áâà2
7700000000022160019
5,8,9/21,10,10,11,12ª1,12ª2,13,15
7700000000022170001
15áâà1,17,17áâà2,23,23ª2,24,24áâà3,24
7700000000022170002
25,27,27áâà1,28,28áâà2,28áâà3,29
7700000000022170003
29áâà1,31/8áâà1,31/8áâà2
7700000000022170004
5ª1,5ª2,5ª3,5,6,8,10,11,16,18,18áâà2
7700000000022180001
21,21áâà3,21áâà4,21,23,25,26,26áâà2
7700000000022180002
28,28,30,30,32,34
7700000000022180003
60,60áâà2,60,62,62ª1,62ª2,62ª2áâà2
7700000000022180004
62ª2áâà4,62,64áâà1,64áâà2,64áâà3
7700000000022180005
64áâà4,64ª1,64ª2,64ª3,64ª4
7700000000022180006
33,33,37,37,38,38/13ª3,39,39ª1,39ª2
7700000000022180007
39ª3,39ª4,40áâà1,40ª1,41,42,42áâà1
7700000000022180008
44áâà1,46,46ª1áâà6,46,46áâà2,46áâà3
7700000000022180009
48,48ª1,48ª2,50,50,50áâà2,50áâà3,52
7700000000022180010
43,43ª1,43,45ª1,45ª2,47áâà4,47ª1,47ª2
7700000000022180011
47ª3,49,49áâà1,51,54ª1,54ª2,54ª3,55ª1
7700000000022180012
55ª2,55ª3,56ª1,56ª2,56ª3,56ª4,56ª4áâà1
7700000000022180013
56ª5,56ª6,57ª1,57ª2,57,58,58,58
7700000000022180014
2/73,4,5,6,7,7áâà2,7áâà3,8,9,11,12
7700000000022190001
12áâà3,12áâà4,13,13áâà3,13áâà6,15,15
7700000000022190002
16ª1,16ª2,17,19,19áâà5,20/53,21,22
7700000000022190003
24,25,26,26,27,28,28,29,29,30,32
7700000000022190004
1,1,2ª1,2ª2,2ª3,2ª4,2ª5,3/9,5,5áâà1
7700000000022200001
5áâà3,5ª1,6ª1,6ª3,7,8,9/26,10,10ª1
7700000000022200002
12/28
7700000000022200003
15áâà3,15áâà4,15áâà5,15ª1,15ª2,16áâà3
7700000000022200004
16áâà4,16ª1,16ª2,19,21,21,23,23,24
7700000000022200005
24,25,25,25áâà2,26,26áâà2,27,27áâà2
7700000000022200006
28,28áâà2,30áâà1,30/24
7700000000022200007
31ª1,31ª2,31ª3,31ª4,31ª5,33áâà7,33ª1
7700000000022200008
33ª2,33ª2áâà1,33ª3,33ª4,33ª5,33ª6
7700000000022200009
7700000000022200010
9,9áâà1,10,11,13,13áâà2,13áâà3,14
7700000000022210001
14ª2,25,25áâà3,26,30,30áâà2,30áâà3
7700000000022210002
1ª1,1ª2,1ª3,3ª3,5,5ª2,5ª3,5,7,7áâà2
7700000000022220001
9,11,13ª2,15/68,21ª1,21ª2,23,23,25,27
7700000000022220002
26ª1,26ª2,30,30áâà2,30áâà3,32,32áâà2
7700000000022220003
32áâà3,32áâà4,32áâà9
7700000000022220004
53,53áâà1,53áâà3,53áâà4,53áâà5,53ª1
7700000000022220005
53ª2,53ª2,53áâà1,55,55áâà1,57ª1,57ª2
7700000000022220006
57ª3,57ª3,57ª3áâà1,57ª4,57ª5,58,59ª1
7700000000022220007
59ª1áâà1,59ª1áâà2,59ª2,59ª3,59áâà5
7700000000022220008
59áâà6,60,61áâà7,61ª1,61ª2,61ª3,61ª4
7700000000022220009
61ª5,61ª6,61áâà1,62,62áâà2,62áâà3
7700000000022220010
62áâà4,62áâà5,62áâà6,62áâà7,62áâà13
7700000000022220011
62áâà14,62,66áâà5,66áâà6,66ª1,66ª2
7700000000022220012
66ª3,66ª4,68áâà,68áâà,68áâà9,68ª1
7700000000022220013
68ª2,68ª2áâà2,68ª3,68ª3áâà2,68ª4,68ª5
7700000000022220014
68ª7,70áâà3,70ª1,70ª2,72/56áâà9
7700000000022220015
29,31,31áâà2,33,37,37áâà5,39,39áâà3,40
7700000000022220016
41,41,41áâà13,41áâà32,42,43áâà1
7700000000022220017
43/26,48,48áâà3,48ª5,48áâà1,50ª1,50ª2
7700000000022220018
52ª1,52ª2,52ª3,52áâà1,54áâà2,54ª1
7700000000022220019
54ª2,54
7700000000022220020
47áâà3,47ª1,47ª2,49ª1,49ª2
7700000000022220021
2,4,4,4áâà1,6,6ª1,6áâà1,8,8áâà2,8
7700000000022220022
14,16ª1,16ª2,16ª2áâà2,18
7700000000022220023
1,2,3,4,5,5,6,7,8
7700000000022230001
3,7ª1,7ª2,7ª3,9ª1,9ª2,9ª3,10,10áâà2
7700000000022250001
10ª3,11,13áâà5,13ª1,13ª2,13ª4,13ª4áâà3
7700000000022250002
15ª1,15ª1áâà2,18ª2,19,20,20áâà2,21,23
7700000000022250003
24,24áâà1,25,27,27áâà1,28,30,30ª2
7700000000022250004
30ª2áâà2,30ª2áâà4,31,33ª1,33ª2,35áâà5
7700000000022250005
35ª1,35ª2,35ª3,37,39
7700000000022250006
34,36,40,41,41áâà2,43,43,45,47,49áâà4
7700000000022250007
49ª1,49ª2,49ª3,51ª1,51ª2,53
7700000000022250008
1áâà1,1áâà2,1áâà3,1ª3,1ª4,1ª6,1ª10
7700000000022260001
1ª11,1ª12,1ª14,1ª25,1ª34,1ª36,1ª46
7700000000022260002
1ª57áâà1,1ª57áâà2,1ª57áâà3,1ª58áâà1
7700000000022260003
1ª58áâà2,1ª58áâà3,1ª97
7700000000022260004
1,3,4,5,5áâà1,6,8,8áâà1,9,9áâà1,10,11
7700000000022270001
12,13,13áâà2,15
7700000000022270002
4,6,6áâà2,6áâà3,6ª2,6ª2áâà1,8,8,10
7700000000022280001
10áâà1,10áâà3,10áâà4,10áâà6,10áâà7
7700000000022280002
10áâà11,11,13,14áâà1,14áâà2,14áâà3
7700000000022280003
14áâà5,14áâà6,15,16,17,17áâà1,17áâà2
7700000000022280004
17áâà4,19,19áâà1,21ª1,21ª2,23,25ª1
7700000000022280005
25ª1áâà1,25ª1áâà3,25ª2,27,29,31ª1,31ª2
7700000000022280006
33,35ª1,35ª2,35ª2áâà1,37,39,39áâà2
7700000000022280007
39áâà3,39áâà4,39áâà5,41
7700000000022280008
1,2,2áâà3,4,5,5áâà1,5áâà2,5áâà3,5áâà4
7700000000022290001
5áâà5,5áâà6,5áâà7,5áâà8,5áâà9,5áâà10
7700000000022290002
5áâà11,5áâà12,5áâà13,5áâà15,5áâà16
7700000000022290003
5áâà17,5áâà18,5áâà19,5áâà20,5áâà21
7700000000022290004
5áâà22,5áâà23,5áâà24,5áâà25,5áâà26
7700000000022290005
5áâà62,5áâà63,5áâà64,5áâà65
7700000000022290006
1,1áâà1,2/34,2/34áâà1,3,3áâà1,3áâà2
7700000000022310001
3áâà3,4,4áâà1,4áâà2,4áâà3,4,5ª1
7700000000022310002
5ª1áâà1,5ª1áâà2,5ª2,5ª3,6ª1,6ª1áâà1
7700000000022310003
6ª2,8ª1,8ª2,8ª3,8ª3áâà1,8ª3áâà2,8ª4
7700000000022310004
7áâà1
7700000000022360001
143400
48,48áâà1,48áâà3,48áâà5,48áâà6,48áâà7
7700000000022380001
48áâà8,61,61áâà2,63ª1,63ª2,65ª1,65ª2
7700000000022380002
67,69áâà3,69ª1,69ª2,71ª1,71ª2,71
7700000000022380003
71áâà2,71áâà3
7700000000022380004
5,5áâà2,7
7700000000022380005
2/32,2,2áâà6,6áâà1,6áâà2,6ª3,6ª5,12
7700000000022380006
14,16,19,20,21,23,23áâà2,23,23áâà2
7700000000022380007
24/17,25,27,28,29,32,35,35áâà4,35áâà5
7700000000022380008
35,35áâà4,36,36áâà1,36áâà2,36áâà6
7700000000022380009
36áâà7,37,38,39,43,44,45,45,45áâà2
7700000000022380010
46áâà2,46/33,46/33áâà5,47,47áâà2,47
7700000000022380011
49ª1,49ª1áâà2,49ª2,49,51,53,55,55áâà2
7700000000022380012
57,57áâà1,57áâà2,57,59/35ª1,59/35ª2
7700000000022380013
59/35ª3
7700000000022380014
7700000000022380015
1,2,3,3áâà2,5,7,8,8áâà2,10,11,12,12
7700000000022400001
12áâà2,13,13áâà2,14,14áâà2,14áâà3
7700000000022400002
14áâà4,16,16áâà2,18,19,19áâà2
7700000000022400003
41,42,43,44,45,45áâà2,45áâà3,46,46,47
7700000000022400004
47áâà2,47áâà3,47áâà6,48áâà2,48/8,48/9
7700000000022400005
50,50,51,51áâà2,51áâà3,52,52áâà2
7700000000022400006
52áâà10,53,54,56/7,58/8áâà1,59,59áâà2
7700000000022400007
60,60áâà2,62,62áâà3,62ª1,62ª1áâà2
7700000000022400008
62ª1áâà5,63,63,64,64áâà1,65,65áâà2
7700000000022400009
65áâà3,65,66,68/7,68/7áâà3,70,70áâà1
7700000000022400010
70áâà2,70áâà3,70áâà4,70áâà5,70áâà6
7700000000022400011
70áâà7,70áâà12,70áâà13,70áâà14,70áâà15
7700000000022400012
70áâà16,70áâà17,77,77áâà2,79,81,83
7700000000022400013
23,24,25,29,29áâà2,33,33áâà2
7700000000022400014
9/26,11,13,15,17,17áâà2,19,19ª1,21,23
7700000000022410001
26,26áâà1,27,28,29,29,30,31,33,34
7700000000022410002
34áâà1,36,36áâà3,36ª1,38áâà1,38/7
7700000000022410003
3,4,8,10,12,14,14áâà2
7700000000022410004
42/6,44,44áâà1,44áâà2,44áâà3,44áâà9,46
7700000000022410005
46áâà2,48áâà3,48ª1,48ª2,50ª1,50ª2,52
7700000000022410006
1,3,3ª1,3,4,4áâà6,5,5ª1,5,7,7ª1,8,8
7700000000022420001
9,10ª1,10ª1áâà2,10,10áâà1,12,14,16
7700000000022420002
17,18,19,19áâà1,24,25áâà4,25/26,26
7700000000022420003
27,28/24,30,32áâà4,32/23,33
7700000000022420004
34/16,35/18,37,38,39,39áâà2,40/19,42
7700000000022420005
43,44/20,46,47/19,49,51/23,52,54,56,57
7700000000022420006
57áâà4,58ª1,58,58áâà1,58áâà2
7700000000022420007
58áâà3,59,59áâà2,60,60áâà2,60ª1,61/8
7700000000022420008
73áâà5,73áâà6
7700000000022420010
93,95,95áâà1,97,99,105,107,107
7700000000022420011
77,77áâà2,77áâà3,77áâà4,77áâà5,77áâà7
7700000000022420012
81,81áâà1,85,85áâà2,87,87áâà2,89,89
7700000000022420013
86/18,88,88áâà2,92,92áâà2,94,94
7700000000022420014
94áâà2,100,100áâà2,100áâà3,104,104
7700000000022420015
106,106áâà2,106,109/2,110,110áâà2,111
7700000000022420016
64,65,65áâà2,65áâà3,66,69,73,73áâà4
7700000000022420009
111áâà2,112,112áâà1,112áâà2,113,113ª1
7700000000022420017
115,115áâà2,116,116áâà3,117,119,121
7700000000022420018
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà7,3
7700000000022440001
3áâà2,4áâà1,4áâà2,4áâà3,5,6áâà3,6
7700000000022440002
7áâà2,7/7,8,8áâà3,9,11,12,12áâà2,13
7700000000022440003
7700000000022440004
13áâà6,13áâà7,13áâà8,13áâà9,13áâà10
7700000000022440005
13áâà11,13áâà12,13áâà14,13áâà15
7700000000022440006
7700000000022440007
7700000000022440008
7700000000022440009
13áâà28,13áâà29,13áâà30,13áâà31
7700000000022440010
13áâà32,13/13áâà34,13/13áâà35
7700000000022440011
13/13áâà37,13/13áâà38,13/13áâà43,14
7700000000022440012
14áâà2,15áâà1,16,16áâà4,17áâà16
7700000000022440013
17áâà18,17ª1,17ª2,17ª3,18,18áâà2
7700000000022440014
7700000000022440015
7700000000022440016
18áâà13,18áâà14,18áâà16,18áâà17,21áâà1
7700000000022440017
7700000000022440018
21áâà7,21áâà8,21áâà8,21áâà9,21áâà10
7700000000022440019
21áâà11,21áâà12,21áâà13,22,24
7700000000022440020
1áâà1,1ª1,1ª2,2/4,3,4,5,6,7áâà1,7áâà2
7700000000022470001
7áâà3,7áâà4,7ª1,7ª2,7ª3,8,9,10ª1,10ª2
7700000000022470002
11ª1,11ª1áâà1,11ª2,11ª2áâà1,11ª2áâà2
7700000000022470003
11ª3,11ª4,11ª4áâà1,12ª1,12ª2,14ª1,14ª2
7700000000022470004
14ª2áâà1,16,18
7700000000022470005
17ª1,17ª2,17ª3,17ª3áâà1,17ª4,17ª5,19
7700000000022470006
21,21ª1,21ª1áâà1,21ª1áâà2,21ª2
7700000000022470007
21ª2áâà3,25ª1,25ª2,25ª2áâà1,25ª2áâà2
7700000000022470008
27ª1,27ª2,29
7700000000022470009
1ª2,1ª2áâà2,1ª3,2/3,3,3áâà2,4ª1,4ª2
7700000000022480001
4ª3,5,5áâà2,6,7ª1,8,8áâà2
7700000000022480002
1áâà1,1áâà2,3ª1,3ª2,3ª3,3ª3áâà2,5ª1
7700000000022490001
5ª2,6áâà1,6ª1,6ª2,7áâà1,7,8,9,9áâà2
7700000000022490002
10,10áâà2,10áâà4,11,12,13,13áâà2
7700000000022490003
21áâà1,36áâà1,36áâà2,36áâà3,36áâà5
7700000000022490004
36áâà9,36áâà10,36áâà11,36áâà12,46áâà1
7700000000022490005
46áâà2,46áâà3,46áâà4,46áâà6,46áâà7
7700000000022490006
46áâà8,46áâà9,46áâà10,46áâà11,50áâà1
7700000000022490007
14áâà1,15,16,16áâà3,17,19,19áâà2
7700000000022490008
6/8,7áâà1,7áâà2,10
7700000000022500001
2,7/2áâà1,13áâà2,13ª1,14áâà1,14áâà2
7700000000022510001
15/19,20áâà1,20áâà2,20áâà3,21
7700000000022510002
25áâà1,25áâà3,25ª1,27áâà1,27áâà2
7700000000022510003
7700000000022520001
7700000000022530001
1áâà9,1áâà11,1áâà12,1áâà13,1áâà14
7700000000022530002
1áâà15,1áâà17,1áâà18,1áâà19,1áâà20
7700000000022530003
7700000000022530004
2áâà1,3áâà4,3áâà5,3áâà12,3áâà17,3áâà19
7700000000022530005
7700000000022530006
3áâà25,3áâà26,3áâà31,3áâà34,3áâà36
7700000000022530007
3áâà39,3áâà40,3áâà42,3áâà1,3áâà2
7700000000022530008
3áâà3,3áâà15,3áâà16,3áâà17,3áâà18
7700000000022530009
3áâà19,5áâà1,5áâà2,5áâà5,5áâà7,5áâà8
7700000000022530010
5áâà9,5áâà10,5áâà12,5áâà13,5áâà14
7700000000022530011
5áâà15,5áâà22,5áâà26,5áâà27,5áâà28
7700000000022530012
5áâà35,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000022530013
7700000000022530014
7áâà13,9,11áâà1,11áâà2,11áâà3,11áâà4
7700000000022530015
7700000000022530016
11áâà10,11áâà11,11áâà12,11áâà12
7700000000022530017
11áâà12,11áâà13,11áâà14,11áâà15
7700000000022530018
11áâà16,11áâà17,11áâà18,11áâà19
7700000000022530019
11áâà20,11áâà23,11áâà24,11áâà25
7700000000022530020
7700000000022530021
2,2áâà2,2,3
7700000000022540001
1,1áâà2,1,2,2áâà2,2,2,3,3,3,4,4
7700000000022550001
4áâà1,4áâà2,4,4,5,6,6áâà2,6
7700000000022550002
6áâà2,6,6,7,8,8áâà2,8ª1áâà2,8
7700000000022550003
8áâà1,8,8áâà1,8áâà2,8,8,8,9
7700000000022550004
9áâà1,9áâà2,9,9,11
7700000000022550005
2áâà1,3,3áâà1,5,6,7,9,10áâà1,12,12áâà2
7700000000022560001
12áâà3,14,16áâà1,16áâà2,16áâà3
7700000000022560002
2,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6,2áâà8
7700000000022580001
2áâà10,2áâà12,2áâà17
7700000000022580002
3,5ª1,5ª2,5ª3,5ª4
7700000000022580004
2,2áâà4,3,3áâà3,4,4áâà2,4,5,6,6áâà2
7700000000022600001
7700000000022600002
8,10,10áâà13,12,13,15,15áâà2
7700000000022600003
2,2,4,4áâà1,4áâà2,6,8
7700000000022620001
5,7,9,13,13áâà2,15,17,19,21,23,25/14
7700000000022620002
2,3áâà1,4áâà1,4áâà2,4áâà3,4áâà4,10áâà3
7700000000022650001
10áâà6,10áâà11
7700000000022650002
2,4,6,6áâà2,6áâà3,8,10ª1,10ª1áâà1,10ª2
7700000000022670001
10ª3,12,12áâà1,12áâà2,12áâà3
7700000000022670002
7700000000022670003
12áâà8,12áâà9,16,16áâà2,18,20,20áâà3
7700000000022670004
22,24
7700000000022670005
7700000000022680001
7700000000022680002
2áâà1,2áâà2,2áâà5,2áâà6,2,6ª1,6ª2
7700000000022680003
6ª3,6ª3áâà2
7700000000022680004
1/23áâà1,1/23áâà2,1/23áâà3,1/23áâà4
7700000000022680005
1/23áâà5,1/23áâà6,1/23áâà7,1/23áâà8
7700000000022680006
1/23áâà11,5_13,15_17
7700000000022680007
3/1,5,13áâà3,13áâà3,13ª1,13ª2,17
7700000000022690001
2,4,4,4áâà2,6,8,8,10,12,14
7700000000022690002
28,28áâà2,28áâà3,28áâà5,28áâà8,28áâà9
7700000000022690003
29,29áâà1,29áâà2,29áâà4,29áâà5
7700000000022690004
7,7áâà1,9,9áâà1,9áâà3,11,11áâà4
7700000000022690005
11áâà5,15,16,16áâà2,16ª2,16ª2áâà2
7700000000022690006
16ª2áâà3,17,18,18,19ª1,19,19áâà2
7700000000022690007
19áâà3,20,20áâà1,21áâà1,21áâà2,21áâà3
7700000000022690008
22ª6,22ª7,22ª8,22ª8áâà1,22ª9,22ª10
7700000000022690009
22ª11,22ª12,22ª12,22ª14,22ª16,24áâà11
7700000000022690010
24áâà22,24ª1,24ª2,24ª3,24ª4,24ª5,24ª15
7700000000022690011
24ª17,24ª18,24ª19,24ª19áâà2,24ª19áâà3
7700000000022690012
24ª20,25áâà2,25ª1,25ª2,25ª3,25,27
7700000000022690013
27áâà1,27áâà2
7700000000022690014
3,3áâà1,5áâà1,5áâà2,5áâà3,9
7700000000022700001
10,10áâà4
7700000000022700002
2/71,4,6,6áâà2,8,8áâà1,10,12,12ª1
7700000000022710001
12ª1áâà1,12ª1áâà2,14,14áâà2,16,18,18ª1
7700000000022710002
18ª1áâà1,20,22,22áâà2,22ª1,22áâà1
7700000000022710003
24ª1,24ª2,24ª2áâà2,24ª2áâà3,24ª2áâà4
7700000000022710004
24ª2áâà5,24áâà1,24áâà2,24áâà3,24
7700000000022710005
26,26áâà1,26,26áâà2,26áâà2,26áâà2
7700000000022710006
28áâà1,28ª1,28ª2,28ª3,28ª3áâà1
7700000000022710007
28ª3áâà2,28ª3áâà3,28ª4,28ª5,28,30
7700000000022710008
32ª1,32ª2,32,34,34áâà2,34áâà3,34áâà4
7700000000022710009
36,36áâà1,36áâà2
7700000000022710010
1,1áâà1,3,3ª1,3ª1áâà2,3ª1áâà3,3ª2,5ª1
7700000000022710011
5ª1áâà5,5ª2,5ª3,5ª4,7,7áâà1,7ª1áâà1,7
7700000000022710012
9ª1,9ª2,9ª3,9ª4,9ª4áâà2,11áâà3,11ª1
7700000000022710013
11ª2,11ª2áâà2,11ª3,13ª1,13ª2,15ª1,15ª2
7700000000022710014
15ª3,15ª4,15ª5,15,17ª1,17ª2,19áâà3
7700000000022710015
19ª1,19ª1áâà2,19ª2,19,21,21áâà2
7700000000022710016
3áâà1,3áâà2,4_6áâà1,4_6áâà3,4_6áâà5
7700000000022720001
4_6áâà8,5áâà1,7áâà1,7/12áâà1
7700000000022720002
7700000000022730001
3áâà9,3áâà10,3áâà11,3áâà11,3áâà12
7700000000022730002
7700000000022730003
3áâà20,3áâà21,5,18,20,22,24,24ª1,26,28
7700000000022730004
30,30áâà1,32ª1,32ª1áâà1,32ª2
7700000000022730005
2,4,4áâà8,4áâà9,6,6áâà4,6ª1,6ª2,8
7700000000022740001
9/27áâà1,9/27áâà2,9/27áâà3,9/27áâà4
7700000000022740002
9/27áâà5,9/27áâà6,9/27áâà7,9/27áâà8
7700000000022740003
9/27áâà9,9/27áâà10,9/27áâà11,9/27áâà12
7700000000022740004
9/27áâà13,9/27áâà14,9/27áâà15
7700000000022740005
9/27áâà16,9/27áâà17,9/27áâà18
7700000000022740006
9/27áâà19,9/27áâà20,9/27áâà21
7700000000022740007
9/27áâà23,9/27áâà24,10
7700000000022740008
1/4áâà1,3,5,6,7,9,10,11áâà1,11áâà2
7700000000022760001
11áâà6,12,12áâà3,13,15áâà2,15,16
7700000000022760002
18áâà1,18áâà2,19áâà1,19/22áâà1
7700000000022760003
19/22áâà2,20áâà1,20áâà2,20áâà3,21,22
7700000000022760004
1ª1,1ª2,1ª3,1ª3áâà6,1ª3,2,3ª1,3ª2,3ª3
7700000000022780001
4,5,6,7,8,9,9áâà1,10,12,14
7700000000022780002
2,3,4,6,7,8,9,10,11,12,13,14,15,17,18
7700000000022790001
19,20,21,22,23,24,25,26
7700000000022790002
1,3,3
7700000000022800001
2,4,6,6áâà1,8áâà1,8áâà2,8ª1,8ª2,10
7700000000022800002
10áâà1,12ª1,12ª2,12ª2áâà1,12,12,12
7700000000022800003
14ª1,14ª1áâà2,14ª2,14ª2áâà1,14ª3,14ª4
7700000000022800004
14ª4áâà1,14ª4áâà3,14,14,16,18,18ª1
7700000000022800005
20ª1,20ª2,20ª2áâà2,20,22ª1,24,24áâà2
7700000000022800006
24áâà3,24ª1,24ª1áâà1,24ª1áâà2,24
7700000000022800007
26áâà1,26ª1,26ª1áâà1,26ª2,26ª3
7700000000022800008
26ª3áâà1,26ª4,26ª5,26ª5áâà1,26,26
7700000000022800009
26áâà1
7700000000022800010
3,3áâà2,3áâà3,4,4áâà2,5
7700000000022810001
1/17áâà1,1/17áâà2,1/17áâà3,4,5áâà1,6/8
7700000000022820001
7áâà1,10_12áâà1,10_12áâà2,11áâà1
7700000000022820002
11áâà2,13/6áâà1,15áâà1,15áâà2,15áâà3
7700000000022820003
15áâà4,20,20ª1,24,27_29áâà1,28,31,33ª1
7700000000022820004
12,13áâà2,21áâà1,23_31áâà1,23_31áâà2
7700000000022830001
17áâà11
7700000000022860001
7700000000022860002
2áâà7,2áâà8,2áâà9,2áâà10,2áâà11,2áâà13
7700000000022860003
2_6áâà13,2_6áâà48,4áâà1,4áâà2,4áâà3,5
7700000000022860004
5áâà2,6áâà1,6áâà2,6áâà3,6áâà8,7,9áâà1
7700000000022860005
9áâà2,9áâà3,9áâà4,11áâà1,11áâà2
7700000000022860006
11áâà3,11áâà4,13áâà1,13áâà2,13áâà3
7700000000022860007
15áâà2,15áâà3,15áâà5,15/18áâà1,17áâà1
7700000000022860008
7700000000022860009
17áâà7,17áâà8,17áâà9,17áâà10,17áâà15
7700000000022860010
19áâà1,19áâà2,19áâà3,21,21áâà2,23
7700000000022860011
23áâà2,27áâà1,27áâà2,27áâà3,27áâà4
7700000000022860012
27áâà6,27áâà7,29,29áâà2,35,35áâà2
7700000000022860013
35áâà1,35áâà2,37_43ª,37_43ª
7700000000022860014
37_43ª,37_43áâà4,37_43áâà5,51,53
7700000000022860015
53/55áâà6
7700000000022860016
1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà5
7700000000022870001
1áâà6,1áâà8,1áâà9,1áâà10,1áâà11,3,5
7700000000022870002
6/4ª1,6/4ª2,8,8áâà1,8áâà2,8áâà3,9/6,11
7700000000022870003
7700000000022870004
14áâà1,14áâà2,14áâà3,14áâà5,14áâà6
7700000000022870005
14ª1,15,16,16áâà5,17,18áâà1,18áâà2
7700000000022870006
18áâà3,20áâà1,20áâà2,20áâà3,20áâà6
7700000000022870007
20áâà7,20áâà9,20áâà10,20áâà11,20áâà18
7700000000022870008
20áâà19,20áâà20,20áâà21,20áâà23
7700000000022870009
20áâà24,21,22,22áâà2,22áâà3,23,25
7700000000022870010
27áâà3,27ª1,27ª2,29/7áâà1,29/7áâà2
7700000000022870011
29/7áâà3,29/7áâà4,29/7áâà8,29/7áâà9
7700000000022870012
7700000000022890001
1,7,7áâà2,9_11,13,13,15
7700000000022890002
14,14áâà4,14,16áâà5,16ª1,16ª2,16ª3
7700000000022890003
16ª4,16ª6
7700000000022890004
1ª1,1ª1áâà1,1ª2,1ª3,1ª4,3ª1,3ª2,3ª3
7700000000022900001
3ª4,3ª5,3ª6,3ª7,5,5ª1,5ª1áâà1,5ª1áâà2
7700000000022900002
5ª2,5ª3,5ª3áâà8,5ª4,5ª5,5ª5áâà1,7áâà5
7700000000022900003
7ª1,7ª1áâà1,7ª3,7ª4,7
7700000000022900004
7700000000022900005
125481
2áâà9,2áâà20,2áâà21,4ª1,4ª1áâà2
7700000000022900006
4ª1áâà3,4ª1áâà4,4ª1áâà5,6,6áâà1,6ª1
7700000000022900007
6ª1áâà2,6ª1áâà3,6ª2,6ª3áâà1,8,8áâà2
7700000000022900008
8áâà3,8ª1,8ª1áâà1,8ª1áâà2,8ª1áâà3
7700000000022900009
8ª1áâà4,8ª1áâà5,9,9áâà1,9áâà4,9áâà6
7700000000022900010
9áâà7,9áâà8,9áâà9,9áâà10,9áâà13,9áâà14
7700000000022900011
9áâà15,9áâà16,9áâà17,9áâà18,9áâà19
7700000000022900012
9áâà20,9áâà25,9áâà27,9áâà29,9áâà31
7700000000022900013
9áâà33,9áâà35,9áâà36,9áâà39,9áâà41
7700000000022900014
9áâà43,9áâà44,10/12,12,12ª1,12ª1áâà2
7700000000022900015
12ª2,12ª3,12ª4,12ª5,12ª6,12ª7,14
7700000000022900016
14áâà2,14ª1,14ª2,14ª3,14ª3áâà1
7700000000022900017
14ª3áâà2,14ª4,14ª5,16,16ª1,16ª2,16ª3
7700000000022900018
16ª4,16ª4áâà1,16ª5,16ª6,16ª7,18ª1
7700000000022900019
18ª1áâà1,18ª1áâà3,20ª1,20ª1áâà2,22ª1
7700000000022900020
22ª2,24,24áâà1,24áâà2,24ª1,26áâà1
7700000000022900021
2,2áâà2,3ª1,3ª2,3ª3,3ª3áâà7,4,5,6,7,8
7700000000022910001
9,11,12,13,14,15,16,17,18,18áâà1,20,21
7700000000022910002
21áâà2,22,23,24,24áâà8,25,26,27,29
7700000000022910003
29áâà2,29áâà3,29ª1,29ª2
7700000000022910004
31,31áâà2,33,34áâà1,35,36,36áâà2,37
7700000000022910005
37áâà2,37áâà3,38,40,41,42,42áâà2,43
7700000000022910006
43áâà2,43,45,45áâà2,47ª1,47ª2,49
7700000000022910007
7700000000022920001
2,3áâà1,3áâà2,3áâà1,3áâà1,4,4áâà2,5
7700000000022940001
6áâà1,6áâà2,7_9áâà1,8áâà1,8áâà2,10,12
7700000000022940002
12_16,15,15áâà2,17áâà1,18_20áâà7
7700000000022940003
18_20ª1,18_20ª2,18áâà1,18áâà2,19,22
7700000000022940004
1,1áâà1,1áâà2,1,2áâà1,2áâà2,3,3,4
7700000000022950001
4áâà1,4áâà2,4ª1,4ª1áâà1,4ª1áâà2
7700000000022950002
4ª1áâà3,4ª1áâà4,4ª1áâà5,4,4,4,5,6
7700000000022950003
6,7,7,7áâà2,7,7,7áâà1,8,8áâà1
7700000000022950004
8áâà2,8,8,8,9,10,11,11áâà1,11áâà2
7700000000022950005
11,11,12,12áâà1,12,13,14,14
7700000000022950006
14áâà1,14áâà2,14áâà3,14áâà4
7700000000022950007
14áâà5,14áâà6,15,15áâà2,15áâà3,15ª1
7700000000022950008
15,15áâà2,15,15,16,16áâà1,16,17
7700000000022950009
18,18áâà2,18ª2,18áâà1,18áâà2,18áâà3
7700000000022950010
18áâà4,18áâà5,20,20,22,22áâà1
7700000000022950011
22áâà2,22,24,26,26,28,28áâà1,28áâà2
7700000000022950012
28áâà3,28áâà4,28áâà5,30,32
7700000000022950013
1,1ª1,1ª1áâà1,1ª2,2,3,4,5,6,9,11,12,13
7700000000022960001
14,15,16,17,18,19,20,21,22,23,24,25,26
7700000000022960002
27áâà1,28,29áâà1,30,31,32,34,36,38,40
7700000000022960003
19/38áâà1,19/38áâà2,20/21,21áâà1,21áâà2
7700000000022970001
1/2,2/8,3,4/5,5,5áâà2,6/8,10,10áâà2,11
7700000000022970002
12,13,13áâà1,13áâà16,15,17,17áâà2,17áâà3
7700000000022970003
9áâà2,9áâà4,9_9áâà2,10,11,11áâà6,13
7700000000022980001
13áâà1,13áâà2,14,14áâà2,16áâà1,16áâà2
7700000000022980002
16áâà3,18,20/2,22,26/2,27,30,31,33,37
7700000000022980003
39,42,42áâà1,42áâà2,43_47,44/2
7700000000022980004
53/25áâà1,53/25áâà2,55áâà1,55áâà2
7700000000022980005
56áâà1,57,57áâà1,57áâà4,58,58áâà1
7700000000022980006
59áâà1,59áâà6,62áâà1,62áâà2,64áâà6
7700000000022980007
64/6áâà1,64/6áâà2
7700000000022980008
1,1ª,1ª,1ª,1ª,1ª11,2ª1,2ª1áâà1,2ª2
7700000000022990001
2ª2áâà1,2ª2,2ª3,2,3,3áâà2,3,3,3
7700000000022990002
3,3áâà1,3áâà2
7700000000022990003
2/3áâà1,2/3áâà2,2/3áâà3,2/3áâà4
7700000000023010001
2/3áâà5,4áâà1,4áâà2,4áâà3,4áâà4,4áâà12
7700000000023010002
4áâà14,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000023010003
6áâà6,8,8áâà4,8áâà5,8áâà6,8áâà7,8áâà8
7700000000023010004
8ª1,8ª2,10áâà1,10áâà2,10áâà3,10áâà4
7700000000023010005
10áâà5,10áâà5,10áâà6,10áâà7,10áâà8
7700000000023010006
10áâà9,10áâà10,10áâà15,10/15áâà5
7700000000023010007
12áâà1,12áâà2,12áâà3,12áâà4,12
7700000000023010008
1áâà1,7,14,14áâà2,14/16,16,18/1áâà1
7700000000023010009
18/1áâà2,18/1ª1,20ª5,20/3áâà1,20/3áâà2
7700000000023010010
20/3áâà3,22áâà1,22áâà3,24,24áâà1
7700000000023010011
23ª1,23ª1áâà1,23ª1áâà2,23ª1áâà3,23ª2
7700000000023020001
23ª3,23ª4,25,25áâà2,25áâà1,27,33
7700000000023020002
9,9áâà1,11,12ª1,12ª1áâà2,48,50,52
7700000000023020003
1,1áâà1,1ª1,1ª2,1ª3,1ª4,1ª5,1ª6
7700000000023020004
1ª6áâà1,1ª7,1ª8,1ª9,1ª10,1ª10áâà1,1ª11
7700000000023020005
1áâà1,1áâà2,1áâà3,1,1,2,2áâà1,3
7700000000023020006
3ª1,3ª2,3ª3,3ª4,3ª4áâà1,4,4áâà1,5
7700000000023020007
5áâà1,5áâà2,5ª1,5ª2,5ª3,5ª4,5ª5,6,7ª1
7700000000023020008
7ª2,7ª3,7ª3áâà1,7,8,10áâà1,10áâà2
7700000000023020009
10áâà3,10áâà5,10áâà6,10áâà7,10áâà8
7700000000023020010
10áâà9,10áâà43,10áâà46,10áâà47
7700000000023020011
5,5áâà2,5áâà3,6,7áâà1,7áâà2,12
7700000000023030001
6áâà1,14,14áâà2
7700000000023040001
14ª2,14ª3,14áâà1,16,16áâà2,16,16,18
7700000000023060001
18,18,20,22ª3,24/2,26áâà1,26áâà2
7700000000023060002
7700000000023060003
26áâà8,26áâà9,26áâà10,28áâà1
7700000000023060004
2ª1,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000023070001
7700000000023070002
7700000000023070003
7700000000023070004
3áâà22,3áâà23,3áâà24,3áâà25,3áâà26,4ª2
7700000000023070005
2,2áâà2,2áâà3,4,4áâà1,4,4áâà1,4ª1
7700000000023080001
4ª1áâà2,4ª2,4ª3,4ª3áâà1,4ª4,4ª5
7700000000023080002
4ª10,6,6,6,6áâà1,8,8,10/6
7700000000023080003
2áâà1,2áâà2,2áâà3,2áâà4,8,8áâà1,8áâà2
7700000000023090001
10,10,12,16áâà1,16áâà3,16áâà6,16áâà7
7700000000023090002
16áâà8,16áâà9,16áâà10
7700000000023090003
1áâà1,1áâà2,1áâà4,2,4,5_19áâà1,6,8,10
7700000000023110001
12/15,14,16,16áâà2,18,18,20,22,24,26
7700000000023110002
26áâà2,26áâà1
7700000000023110003
11áâà1,13áâà1,13áâà4
7700000000023120001
4áâà4,4áâà5,4áâà7,6áâà3,8áâà1,8áâà2
7700000000023120002
8áâà6,10/2áâà1,12/1áâà1,12/1áâà2
7700000000023120003
12/1áâà3,16áâà3,16áâà4,16áâà5,16/2áâà1
7700000000023120004
16/2áâà2
7700000000023120005
2/6áâà1,2/6áâà2,2/6áâà5,4,4áâà3,4áâà6
7700000000023130001
4áâà6,4áâà7,5,5áâà2,7áâà1,7áâà2,7áâà3
7700000000023130002
9áâà1,9áâà2,9áâà3,11áâà1,11áâà5,15áâà4
7700000000023130003
15/9áâà1,15/9áâà2,15/9áâà3,15/9áâà5
7700000000023130004
15/9áâà6
7700000000023130005
1/6,2/4,3ª1,4,4áâà1,5,6,7,8,8,10,12
7700000000023140001
12,12áâà2,14,14,16
7700000000023140002
áâà1,áâà2,áâà3,1,1áâà2,1áâà4,1áâà7,1
7700000000023150001
7700000000023150002
3áâà7,3áâà7,3áâà8,3áâà9,3áâà10,3áâà11
7700000000023150003
3áâà12,3áâà13,3áâà14,3áâà15,3áâà24
7700000000023150004
3áâà25,3áâà26,3áâà27,3áâà29,3áâà30,5
7700000000023150005
7700000000023150006
5áâà9,5áâà11,5áâà12,5,7,7áâà2,7áâà3
7700000000023150007
7700000000023150008
7700000000023150011
9áâà10,9áâà11,9,9áâà2,9áâà3,9áâà4
7700000000023150012
9áâà5,9,9áâà1,9áâà2,9áâà3,9áâà4
7700000000023150013
9áâà5,9áâà6,9áâà8,9áâà9,9áâà11
7700000000023150014
9áâà12,13,13áâà2,13áâà3
7700000000023150015
15áâà5,15áâà6,15áâà7,15áâà9
7700000000023150016
15áâà12,22,22áâà2,22áâà5,22áâà6
7700000000023150017
2ª1,2ª1áâà2,2ª1áâà3,2ª1áâà4,2ª2
7700000000023150018
2ª2áâà2,2,2,4ª1,4ª2,4,4,6ª1,6ª2
7700000000023150019
6ª2áâà2,6ª2áâà3,6ª3,6,8ª2,8ª3,8,10
7700000000023150021
12ª1,12ª1áâà2,12ª1áâà3,12ª1áâà5,12
7700000000023150022
13áâà1,13áâà2,13áâà3,13áâà4
7700000000023150023
13áâà5,14,14ª1,16ª1,16ª2,16ª3
7700000000023150024
16ª3áâà2,16ª3áâà3,16,18ª1áâà3,18ª1
7700000000023150025
15áâà1,15áâà2,15áâà3,15áâà4,17
7700000000023150026
7700000000023150027
7700000000023150028
7700000000023150029
7700000000023150030
17áâà20,17áâà24,17áâà25,17áâà30,17ª2
7700000000023150031
17ª2áâà1,17ª2áâà2,17,19,20ª1,20ª1áâà2
7700000000023150032
20ª1áâà3,22,22áâà13,22áâà14
7700000000023150033
22áâà22,22áâà23,22áâà24,22áâà25
7700000000023150034
22áâà26,22áâà27,22áâà28,24áâà3
7700000000023150035
24áâà1,25,27áâà1,27áâà2,32,32áâà3
7700000000023150036
32áâà4,34áâà3
7700000000023150037
18ª1,18ª1áâà2,18ª2,18ª2áâà2,18
7700000000023150020
15,15áâà2,15áâà3,15áâà4,15áâà5,15áâà6
7700000000023150038
7700000000023150039
15áâà1,15áâà2,15áâà3,15áâà4
7700000000023150040
22áâà2,22áâà3,22áâà5,22áâà7
7700000000023150041
22áâà10,22áâà11,22áâà12,22áâà1
7700000000023150042
7700000000023150043
22áâà6,22áâà7,22áâà8,22áâà9
7700000000023150044
22áâà10,22áâà11,22áâà12,22áâà13
7700000000023150045
22áâà14,22áâà15,22áâà16,22áâà17
7700000000023150046
22áâà18,22áâà19,22áâà20,22áâà21
7700000000023150047
7700000000023150009
7áâà21,7áâà22,7áâà23,7,9,9áâà2,9áâà3
7700000000023150010
22áâà22,22áâà24,22áâà26,22áâà27
7700000000023150048
22áâà29,22áâà30,22áâà31,22áâà32
7700000000023150049
22áâà34,22áâà36,22áâà37,22áâà38
7700000000023150050
22áâà39,22áâà42,22áâà43,22áâà44
7700000000023150051
24áâà1,24áâà2,24,24áâà2,24áâà4
7700000000023150052
24áâà5,24áâà6,24áâà7,24,24áâà1
7700000000023150053
24áâà2,24áâà3,24áâà4,24áâà5
7700000000023150054
24áâà6,24áâà9,26,26,26,34,34áâà2,34
7700000000023150055
1,2,3,4,6,7,8áâà1,8áâà2,9,10áâà1
7700000000023160001
10áâà2,10ª2,11áâà1,11áâà2,12,13,14,15
7700000000023160002
16,17,18,19,20,20áâà2,21áâà1,21áâà2,22
7700000000023160003
22áâà1,23,24,25,25,26,27,28,30,31áâà1
7700000000023160004
31áâà2,32,33,34,35,36,37,38,39,40,42
7700000000023160005
1,2,3,4,5,7,8,9,10,11,12,13,14,15,16
7700000000023170001
17áâà2,18,19,20,21,22,23,24,25,26,27
7700000000023170002
28,29,30,31,32,34,36,36áâà1,38,40
7700000000023170003
1,2,3,4,4áâà1,4áâà2,6,8,9,10,11,12áâà1
7700000000023180001
12áâà2,13,14áâà1,14áâà2,14,15,16,17
7700000000023180002
18,19,20,21,23,24,25,26,26áâà18
7700000000023180003
26áâà20,27,28,29,30,31,32,33,34,36,38,40
7700000000023180004
3,5áâà1,5_7áâà4,5,6áâà1,6áâà2,7áâà2
7700000000023190001
7áâà3,7áâà4,8áâà2,8áâà3,8áâà4,8áâà2,9
7700000000023190002
11,11áâà1,12áâà1,12áâà2,13,14áâà1
7700000000023190003
14áâà2,17,18/5áâà1,19/28,20áâà1,20áâà3
7700000000023190004
20áâà4,20áâà14,20áâà15,20,21áâà1
7700000000023190005
21áâà2,21áâà3,21áâà4,21áâà5,22,23áâà1
7700000000023190006
7700000000023190007
23áâà7,23áâà8,24,25áâà3,26áâà1,26áâà2
7700000000023190008
26áâà3,26áâà6,28áâà1,28áâà2,30áâà1
7700000000023190009
7700000000023190010
2,2áâà1,2áâà4,2ª2,2ª2áâà2,3,3áâà2
7700000000023220001
7700000000023220002
3áâà8,3áâà9,3áâà10,3áâà11,3áâà12
7700000000023220003
3áâà13,4,5,5áâà1,5áâà2,5áâà3,5áâà4
7700000000023220004
5áâà5,5áâà8,5áâà9,5áâà10,5áâà11,5áâà14
7700000000023220005
5áâà15,5áâà19,5áâà20,5áâà21,5áâà22
7700000000023220006
5áâà23,5áâà24,5áâà25,5áâà27,6,6áâà2,7
7700000000023220007
7áâà2,8,8ª2,8ª3,9,10,10ª2,10ª2áâà2
7700000000023220008
11áâà1,11áâà1,11áâà6,11,12,12ª2
7700000000023220009
12ª2áâà2,13,13,14,15,15,16,19
7700000000023220010
4/17áâà1,4/17áâà3,4/17áâà4,4/17áâà4
7700000000023240001
4/17áâà5,4/17áâà6,4/17áâà7,4/17áâà10
7700000000023240002
4/17áâà11,4/17áâà14
7700000000023240003
3áâà1,3áâà1,3áâà1,3áâà2,3áâà3,3áâà4
7700000000023240004
3áâà5,3áâà6,3áâà7,3áâà8,3áâà9,3áâà11
7700000000023240005
3áâà13,3áâà20,5áâà1,5áâà2,6/20áâà1
7700000000023240006
6/20áâà2,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000023240007
8áâà1,8áâà1,8áâà2,8áâà2,8áâà2,10
7700000000023240008
10áâà1,10áâà2,10áâà3,10áâà5,10áâà7
7700000000023240009
11ªáâà1,11áâà4,11áâà5,11áâà8,12áâà1
7700000000023240010
14áâà3,14/5,14/6,16/10áâà1,16/10áâà3
7700000000023240011
16/10áâà5,16/10áâà7,16_18áâà4,18/15
7700000000023240012
1,1ª1,1ª1áâà1,1ª1áâà2,2,2ª1,3,3áâà1
7700000000023250001
3áâà2,3ª1,3ª2,3ª3,4,5,5áâà1,5áâà2
7700000000023250002
5áâà3,7,7ª1,7ª1áâà1,8,8áâà1,8áâà2
7700000000023250003
1,2,3,4,7,8,9,10,11,12,13,14,15,16,17,18
7700000000023270001
2,2áâà3,2áâà4,2ª3,4,4áâà2,4áâà3
7700000000023290001
2,3,4,5,6,7
7700000000023300001
1/14,2/12,3,5/19,6/17,7,8/1,9,10,11,12
7700000000023310001
7700000000023310002
7700000000023320001
1áâà7,1ª1áâà1,1ª1áâà2,2ª1,4ª1,4ª2
7700000000023320002
4ª2áâà3,6áâà3,6ª1,6ª2,6ª2áâà4,6ª2áâà7
7700000000023320003
8,10,12,12áâà1,14,14áâà1,14áâà3
7700000000023320004
7700000000023320005
14áâà9,14áâà10,14áâà11,14áâà12,14ª1
7700000000023320006
14ª2áâà1,14ª2áâà2,14,16,16áâà1,16áâà2
7700000000023320007
16áâà3,16áâà5,16áâà6,16áâà7,16áâà9
7700000000023320008
7700000000023320009
4,6,8,10,10áâà2,10áâà5,12/13,14áâà1
7700000000023330001
14áâà2,14áâà3,16,16áâà2,16áâà3,16áâà4
7700000000023330002
16áâà5
7700000000023330003
3,3áâà3,9,11,11áâà3,11áâà4,11/15áâà6
7700000000023330004
19áâà3,19áâà4,19ª1,19ª2,19ª2áâà2,19
7700000000023330005
19áâà1,19áâà2,19áâà3,19áâà4
7700000000023330006
19áâà6,19áâà8,19áâà9,19áâà10
7700000000023330007
19áâà11,19áâà12,19áâà13,19áâà14
7700000000023330008
19áâà15,19áâà16,19áâà20,21ª2,21ª3
7700000000023330009
21ª4,23,23áâà2,23áâà4,23,23áâà2
7700000000023330010
23áâà5,23áâà92,23ª1,23ª2,23ª3
7700000000023330011
23ª5,23ª6,23ª11,23ª16,23ª29
7700000000023330012
23ª33,23ª37,23ª38,23ª50,23ª54
7700000000023330013
23ª59,23ª62,23,23ª1,23ª2,23,25
7700000000023330014
27,27áâà1,27áâà3,27áâà4,27áâà5,27áâà6
7700000000023330015
7700000000023330016
1/28,1/28áâà2,3ª1,3ª2,3ª3,3ª4
7700000000023350001
2,2áâà2,2áâà4,3,3,4,5ª2,6ª1,6ª2
7700000000023360001
6ª2áâà4,7,8,10,14,14áâà3,14,16,16áâà2
7700000000023360002
16,21,21áâà2,23,25ª1,25ª1áâà1
7700000000023360003
25ª1áâà2,25ª2,25ª2áâà1,27,27,29áâà5
7700000000023360004
29ª1,29ª1áâà4,29ª2,31,31
7700000000023360005
2,3,3áâà2,4,4áâà2,4áâà3,6,6áâà2,8,33
7700000000023370001
35,39_41,45áâà1,47áâà2,47áâà3,47ª1,47ª2
7700000000023370002
16ª1,16ª2,18
7700000000023370003
6áâà1,7,8,10ª2,10/2áâà1,12,13_15áâà25
7700000000023380001
14,15áâà12,16,18áâà1,18áâà3,18áâà4
7700000000023380002
18áâà5,18áâà6,18áâà8,18áâà9
7700000000023380003
60/2
7700000000023390001
1/3,2áâà2,2áâà3,2/10áâà1,2/10áâà7,3/9
7700000000023390002
4/10,4/10áâà2,4/10áâà5,7/10áâà1
7700000000023390003
7/10áâà2,7/10áâà3,7/10áâà4,7/10áâà5
7700000000023390004
7700000000023390005
9áâà7,10áâà1,11/14áâà1,13áâà1,15
7700000000023390006
17áâà1,17áâà2,19,20áâà1,20áâà2,20áâà3
7700000000023390007
20áâà4,20áâà5,21áâà1,21áâà4,22,22áâà1
7700000000023390008
23áâà1,23áâà3,24/2áâà4,25áâà1,26áâà1
7700000000023390009
26áâà2,27,28áâà3,28áâà4,28áâà16
7700000000023390010
28áâà17,28ª1,28ª2,29/32áâà1,29/32áâà4
7700000000023390011
29/32áâà5,29/32áâà6,29,30,30áâà2,30ª2
7700000000023390012
31,33/41áâà1,33/41áâà2,33/41áâà3
7700000000023390013
35áâà1,37áâà1,37áâà3,37/14áâà1,39áâà1
7700000000023390014
39áâà3,42áâà1,42áâà2,42áâà4,42/2áâà8
7700000000023390015
43áâà1,43áâà2,43áâà3,44/2,45,47áâà1
7700000000023390016
47áâà2,49,50áâà6,50/1áâà1,50/1áâà2
7700000000023390017
50/1áâà3,50/1áâà4,51/14áâà1,51/9
7700000000023390018
52áâà1,52áâà3,53áâà1,53áâà2,54áâà1
7700000000023390019
54áâà3,54áâà12,55áâà1,55áâà2,56áâà1
7700000000023390020
2,3,3áâà3,4/6,5,7áâà1,7áâà3,7áâà5,8
7700000000023400001
9áâà1,9áâà2,9áâà6,10,10áâà2,11áâà1,12
7700000000023400002
1,1,3ª1,3ª2,3ª2áâà2,3,5ª1,5ª2,7ª1
7700000000023440001
7ª1áâà1,7ª2,7ª3,7,9,9ª1,9ª1áâà2,9ª2
7700000000023440002
9ª3,9ª3áâà1,9ª4,9ª4áâà1,9,11ª2,13ª1
7700000000023440003
13ª2,13ª2áâà1,13ª2áâà2,13ª3,13ª4,15ª1
7700000000023440004
15ª2,15ª3,17ª1,17ª1áâà1,17ª2,19,19áâà2
7700000000023440005
21,23áâà1,23áâà2,23,25áâà1,25áâà2
7700000000023440006
7700000000023440007
7700000000023440008
25áâà13,25áâà14,25áâà15,25áâà16
7700000000023440009
25áâà17,25áâà18,25áâà19
7700000000023440010
20,20ª1,22ª1,22ª2,22ª3,22ª3áâà1,22ª4
7700000000023440011
24,24áâà1,26ª1,26ª2,26ª2áâà1,26ª2áâà2
7700000000023440012
28,28áâà1,30ª1,30ª1áâà1,30ª1áâà2
7700000000023440013
30ª1áâà3,30ª2,30ª3,30ª3áâà1,32,32áâà2
7700000000023440014
32ª1,32ª2,32ª3,32ª5
7700000000023440015
2,2ª1,4ª1,4ª1áâà1,4ª2,4ª2áâà1,6ª1,8
7700000000023440016
8áâà1,8áâà2,8áâà3,10,10áâà1,10áâà2
7700000000023440017
10áâà3,10áâà1,10áâà2,10áâà3,10áâà4
7700000000023440018
10áâà5,10áâà6,12,14,14áâà1,14ª1
7700000000023440019
14ª1áâà1,16ª1,16ª2,16,18
7700000000023440020
7700000000023440021
29áâà6,29áâà20,29áâà21,31áâà1,31áâà2
7700000000023440022
31áâà3,31,31áâà1,31áâà2,31áâà3
7700000000023440023
31áâà4,31áâà1,31áâà2,31áâà3
7700000000023440024
31áâà4,31áâà5,31áâà9,31áâà16
7700000000023440025
31áâà1,31áâà2,31áâà3,31áâà4
7700000000023440026
31áâà1,31áâà2,31áâà3,31áâà4
7700000000023440027
31áâà5,31,33áâà1,33áâà2,33áâà3
7700000000023440028
7700000000023440029
33áâà9,33áâà10,33áâà11,33áâà12,33
7700000000023440030
33áâà1,33áâà2,33áâà3,33áâà4
7700000000023440031
33áâà5,33áâà6,34ª1,34ª2,34ª3,34,35
7700000000023440032
35áâà1,35áâà2,35áâà3,35áâà4,36
7700000000023440033
36áâà2,37,37,37áâà1,37áâà2,37áâà3
7700000000023440034
37,37áâà1,37áâà2,39áâà1,39áâà2
7700000000023440035
39áâà3,39áâà4,39áâà5,39áâà6,39áâà7
7700000000023440036
39áâà8,39áâà9,39áâà10,39áâà11,39áâà12
7700000000023440037
39áâà13,39,39áâà1,39áâà2,39áâà3
7700000000023440038
39áâà4,39áâà5,39áâà6,39áâà7
7700000000023440039
39áâà8,39áâà1,39áâà2,39áâà3
7700000000023440040
39áâà4,39áâà5,39áâà7,39áâà8
7700000000023440041
39áâà9,40,40áâà1,40ª1,40ª1áâà1,41áâà1
7700000000023440042
41áâà2,41áâà3,41áâà4,41áâà5,41áâà6
7700000000023440043
41áâà7,42,42ª1,46,46áâà1,48,50,52ª1
7700000000023440044
52ª1áâà1,52ª1áâà2,52ª2,52ª3,52ª4,52ª5
7700000000023440045
52ª5áâà1,54,54ª1,54ª1áâà1,54ª2,54ª3
7700000000023440046
54ª4,54ª4áâà1,56,56ª1,56ª1áâà2,56ª2
7700000000023440047
3,5áâà1,6áâà1,6áâà2,6áâà3,7,8áâà1
7700000000023450001
8áâà2,9,9áâà1,10áâà3,10_12
7700000000023450002
46,46áâà1,46,48áâà1,48áâà2,48áâà3
7700000000023460001
48áâà4,50áâà1,50áâà2,50áâà3,50áâà4
7700000000023460002
50áâà5,50áâà6,50áâà7,50áâà9,50áâà10
7700000000023460003
50áâà12,50áâà15,50áâà16,50áâà18
7700000000023460004
50áâà19,50áâà22,50áâà23,50áâà24
7700000000023460005
50áâà25,50áâà26,50áâà27,50áâà28
7700000000023460006
50áâà29,50áâà30,50áâà31,50áâà32
7700000000023460007
50áâà33,50áâà34,50áâà36,50áâà37
7700000000023460008
50áâà38,50áâà39,50áâà40,50áâà44,50áâà45
7700000000023460009
1,1áâà1,1áâà2,1áâà3,1áâà4,3,5,15áâà1
7700000000023460010
7700000000023460011
17áâà1,17áâà2,17áâà3,17áâà5,17áâà6
7700000000023460012
17áâà8,33,33áâà1,39áâà1,39áâà2,39áâà3
7700000000023460013
39áâà4,39áâà5,39áâà6,39áâà7,39áâà8
7700000000023460014
39áâà9,39áâà10,39áâà13,39,39áâà1
7700000000023460015
7700000000023460016
39áâà6,39áâà8,48áâà1,48áâà2
7700000000023460017
48áâà3,48áâà4,48áâà5,48áâà6
7700000000023460018
48áâà7,48áâà8,48áâà9,48áâà10
7700000000023460019
48áâà11,48áâà12,48áâà13
7700000000023460020
1,1,1,1áâà1,1áâà2,1áâà3,1
7700000000023470001
7700000000023470002
7700000000023470003
11áâà11,11áâà12,11áâà13,11áâà15
7700000000023470004
11áâà16,17áâà13,17áâà19,17áâà22
7700000000023470005
17áâà37,17áâà40,17áâà43,17áâà44
7700000000023470006
17áâà45,17áâà46,17áâà47,17ª2,17ª3
7700000000023470007
17ª14,17ª25,17ª26,17ª31,17ª32,17ª33
7700000000023470008
17ª35,17ª36,17ª41,33áâà1,33áâà2,33áâà4
7700000000023470009
33áâà7,33áâà8,33áâà9,33áâà10,35,35áâà2
7700000000023470010
7700000000023470011
3áâà7,3áâà8
7700000000023470012
1áâà1,1ª1,1ª2,2,3,3áâà1,3áâà2,4,4áâà1
7700000000023480001
4áâà2,4ª1,4ª2,4áâà7
7700000000023480002
1,1ª1,1ª2,1ª3,1/4,1,2,3,3ª1,3ª1áâà1
7700000000023490001
3ª1áâà2,3ª1áâà3,4,5,6,6áâà1
7700000000023490002
3áâà2,3áâà5,5áâà1,5áâà2,5áâà3,5áâà4
7700000000023510001
7700000000023510002
5áâà11,5áâà12,5áâà13,5áâà14,5áâà16
7700000000023510003
9áâà1,9áâà2,9áâà3,9áâà5,9áâà6,11/14
7700000000023510004
7700000000023510005
18áâà6,18áâà7,18áâà8,18áâà9
7700000000023510006
2áâà4,3,5áâà1,5áâà2,5ª1,6áâà1,6ª1,7,8
7700000000023520001
10,11áâà1,11áâà2,12,13,13áâà2,14,15
7700000000023520002
16áâà1,17,18,19,20,21,22,23áâà2,23áâà3
7700000000023520003
3áâà1,3áâà2,3áâà5,3áâà7,3áâà8,3áâà9
7700000000023530001
3áâà10,3áâà11,3áâà15,4áâà1,5áâà1,5áâà2
7700000000023530002
5áâà3,5áâà4,5áâà5,5áâà7,5áâà12,5áâà13
7700000000023530003
6áâà1,6áâà3,8áâà2,8/12áâà2,8/12áâà4
7700000000023530004
8/12áâà5,8/12áâà6,8/12ª1,10,12,12áâà2
7700000000023530005
14,16áâà3,16áâà10,16/5áâà1
7700000000023530006
1áâà1,1áâà3,2,2áâà1,3,3áâà7,3áâà9
7700000000023540001
3áâà10,3áâà11,3áâà22,3ª1,3ª2,3ª3,3ª4
7700000000023540002
3ª5,3ª6,3ª7,3ª8,3ª9,4,5áâà1,5áâà2
7700000000023540003
5áâà4,5,5áâà2,6,6áâà2,6/2áâà4
7700000000023540004
6/2áâà5,6/2áâà6,6/2áâà7,6/2áâà15
7700000000023540005
6/2áâà16,6/2áâà17,6/2áâà18,6/2áâà19
7700000000023540006
6/2áâà20,6/2áâà21,6/2áâà22,8,10,12,14
7700000000023540007
7700000000023540008
7700000000023550002
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2ª1áâà1
7700000000023550005
2ª2,2ª2áâà1,2ª2áâà2,2ª2áâà3
7700000000023550006
5áâà10,5áâà12
7700000000023550001
1,1ª1,2ª3,2,3,3áâà2,3áâà4,3áâà6,3áâà7
7700000000023550003
3áâà8,3ª1,3ª1áâà2,3ª2,3ª2áâà1,3ª2áâà1
7700000000023550004
3ª2áâà2,3ª2áâà6,3ª3,3_5áâà1,3_5áâà2
7700000000023550007
3_5áâà3,3_5áâà4,3_5áâà5,3_5áâà6
7700000000023550008
3_5áâà7,3_5áâà8,3_5áâà9,3_5áâà10
7700000000023550009
3_5áâà11,3_5áâà12,3_5áâà13,3_5áâà14
7700000000023550010
3_5áâà15,3_5áâà16,3,3áâà1,4,4áâà2
7700000000023550011
4áâà7,4áâà8,4ª1,4ª2,4ª2áâà1,4ª2áâà2
7700000000023550012
4ª2áâà3,4ª2áâà4,4ª2áâà5,5,5áâà1,5áâà3
7700000000023550013
5áâà4,5áâà11,5áâà13,5ª1,6,6áâà1,6áâà2
7700000000023550014
7700000000023550015
6áâà9,6áâà10,6áâà12,6áâà16,6áâà17
7700000000023550016
6áâà18,6áâà19,6áâà21,6áâà22,6áâà23
7700000000023550017
6áâà24,6áâà25,7,9ª1,9ª1áâà1,9ª2,10áâà1
7700000000023550018
11ª1,12,15ª1,15ª1áâà3,17ª1,18,18áâà1
7700000000023550019
18áâà2,18áâà3,18áâà4
7700000000023550020
16,16áâà3,16áâà4
7700000000023550021
19,20,21,22,23,23áâà4,23áâà5,24,26ª1
7700000000023550022
26ª1áâà1
7700000000023550023
1áâà3,1/33áâà1,1/33áâà2,2/4,4ª1,4/6,5
7700000000023560001
6,7áâà1,14ª,16,18,18áâà1,18áâà2
7700000000023560002
7700000000023560003
18áâà8,18áâà9,18áâà10,18/20áâà3
7700000000023560004
18/20áâà15,18/20ª2,18/20ª3,18/20ª4
7700000000023560005
18/20ª5,18/20ª6,18/20ª7,18/20ª8
7700000000023560006
18/20ª9,18/20ª9áâà6,18/20ª9,18/20ª10
7700000000023560007
18/20ª11,18/20ª12,18/20ª15,18/20ª16
7700000000023560008
18/20ª17,18/20ª18,18/20ª18,18/20ª20
7700000000023560009
18/20ª29,18,20áâà1,20áâà2,20áâà3
7700000000023560010
20áâà4,20áâà6,22áâà1,22áâà2,22áâà3
7700000000023560011
7700000000023560012
7700000000023560013
22áâà14,22áâà17,22áâà18,22áâà19
7700000000023560014
22áâà20,22áâà21,22áâà22,24áâà1,24áâà2
7700000000023560015
24áâà3,26áâà1,26áâà1,26áâà2,26áâà3
7700000000023560016
7700000000023560017
30áâà6,30áâà7,30áâà8,30áâà11,30áâà13
7700000000023560018
30áâà14,30áâà17,34áâà1,34áâà1,34áâà2
7700000000023560019
34áâà3,34áâà4,34áâà4,34áâà5,34áâà6
7700000000023560020
7700000000023560021
34áâà12,34áâà12,35áâà1,36áâà1,36áâà2
7700000000023560022
7700000000023560023
36áâà10,36áâà11,36áâà13,38áâà1,38áâà1
7700000000023560024
7700000000023560025
38áâà7,39áâà1,40áâà1,40áâà2,40áâà3
7700000000023560026
40áâà4,40áâà5,40áâà6,40áâà7,40áâà9
7700000000023560027
40áâà10,40áâà11,43_45áâà1,43_45áâà2
7700000000023560028
43_45áâà3,43_45áâà5,43_45áâà6
7700000000023560029
51_53áâà1,55/59áâà1,55/59áâà2
7700000000023560030
61_67áâà1,71
7700000000023560031
2/2áâà1,2/2áâà6,2/2áâà7,2/2áâà8
7700000000023570001
2/2áâà9,2/2áâà10,2/2áâà11
7700000000023570002
4áâà1,4áâà3,5/12áâà1,5/12áâà2,8áâà1
7700000000023570003
8áâà2,8áâà3,8áâà4,10,12áâà1,12áâà2
7700000000023570004
12áâà3,12áâà4,12áâà5,12áâà6,12áâà7
7700000000023570005
12áâà8,12áâà9,12áâà10,12áâà11
7700000000023570006
1,1áâà1,1/2,1,1áâà3,2,2,2áâà3
7700000000023580001
2áâà4,3/1,3/1áâà1,3,4,5,6áâà1,6áâà2
7700000000023580002
6/34,7/9,7/9ª1,8ª1,8ª3,8ª4,8ª5,8ª6,8ª7
7700000000023580003
8ª9,8ª10,8ª11,8ª12,8ª13,8ª14,8ª15,8ª19
7700000000023580004
8ª20,8ª24,8ª27,8ª28,8ª29,8ª30,8ª31
7700000000023580005
8ª32,8ª34,8ª35,8ª36,8ª43,8ª48,8ª49
7700000000023580006
8ª51,11,15áâà1,15áâà2,15áâà3,17/19
7700000000023580007
17/19áâà2,21áâà1,21áâà2,21áâà5,21áâà8
7700000000023580008
23,23ª2,23ª3,23ª4,23ª5,23ª6,23ª7,23ª8
7700000000023580010
23ª9,23ª10,23ª11
7700000000023580011
24,24áâà2,24áâà2,24áâà3,24áâà4,24áâà5
7700000000023580012
127137
24áâà6,24áâà7,24áâà8,24áâà9,24áâà10
7700000000023580013
24áâà11,24áâà12,24áâà14,24áâà16
7700000000023580014
24áâà17,24áâà22,24áâà24
7700000000023580015
1,1,1,2áâà1,2áâà2,2áâà5,2áâà1,3
7700000000023590001
4áâà1,4ª1,4ª2,4ª2áâà1,4ª2áâà2,5,6
7700000000023590002
6áâà2,6áâà4,6áâà5,6áâà1,6áâà2,6áâà4
7700000000023590003
6áâà5,6áâà6
7700000000023590004
12áâà7,12áâà8,12áâà9,12áâà10,12áâà11,21
7700000000023610001
6,8áâà1,8áâà2,8áâà3,8áâà4,8áâà10,10
7700000000023630001
11áâà1,11áâà2,11áâà1,11áâà2,11áâà3
7700000000023630002
11áâà4,11áâà5,11áâà6
7700000000023630003
1/2áâà1,2,2áâà5,4,6
7700000000023640001
2,4,6,6áâà1,12,12áâà1
7700000000023650001
7,7áâà1,9,11áâà1
7700000000023650002
3áâà1,4,5áâà1
7700000000023660001
2,2áâà1,2ª1,2ª1áâà2,5/7,6
7700000000023660002
26,26áâà2,26áâà3,28,28áâà1,28áâà2,28áâà3
7700000000023670001
1áâà1,1áâà2,3áâà1,4,5,7áâà1,14,16,17
7700000000023670002
17áâà1,17áâà2,17áâà3,17áâà4,17áâà6
7700000000023670003
17áâà7,17áâà8,17áâà11,17áâà12,17áâà15
7700000000023670004
17áâà17,17áâà18,17áâà19,17áâà20
7700000000023670005
17áâà21,17áâà22,17áâà23,17áâà24
7700000000023670006
17áâà25,17áâà26,17áâà90,17áâà91
7700000000023670007
17áâà92,17áâà94,17áâà97,17áâà98
7700000000023670008
17áâà100,17áâà1,17áâà2,17áâà4
7700000000023670009
17áâà6,17áâà7,17,17áâà1,17áâà2
7700000000023670010
17áâà3,17áâà4,17áâà5,17áâà6
7700000000023670011
17áâà7,17áâà9,17áâà1,19áâà1,19áâà2
7700000000023670012
19áâà3,19áâà4,19áâà9,19áâà10,19áâà16
7700000000023670013
19áâà18,19áâà19,19áâà20,24áâà8,24ª1
7700000000023670014
24ª2,24ª3,24ª4,24ª5,24ª6,24ª6áâà1
7700000000023670015
25áâà2,25áâà3,25áâà5,25áâà8,25áâà9
7700000000023670016
25áâà19,25áâà20,25áâà21,25ª1,25ª2,25ª3
7700000000023670017
25ª4,25ª6,25,25áâà1,25áâà13
7700000000023670018
25áâà15,25áâà17,25áâà18,25áâà19,27
7700000000023670019
27áâà1,31áâà1,31,33,33áâà1,33áâà2
7700000000023670020
33áâà3
7700000000023670021
1,1/2áâà2,1/2áâà3,3,4/29,4/29áâà2,5
7700000000023680001
5áâà2,6áâà1,6áâà2,7áâà1,7áâà2,7áâà5
7700000000023680002
8ª1,8ª2,8ª3,9áâà1,9áâà1,9áâà2,9áâà3
7700000000023680003
7700000000023680004
9áâà10,9áâà11,9áâà12,9áâà14,9áâà15
7700000000023680005
9áâà16
7700000000023680006
7700000000023680007
7700000000023680008
14áâà12,14áâà13,14áâà14,14áâà15
7700000000023680009
14áâà16,14áâà17,14áâà18,14áâà19
7700000000023680010
14áâà20,14áâà21,14áâà22,14áâà24
7700000000023680011
14áâà49,15áâà1,16áâà2,16áâà3,17áâà1
7700000000023680012
19áâà1,19áâà1,19áâà2,19áâà3,19áâà4
7700000000023680013
21áâà1,21áâà1,21áâà1,21áâà3,21áâà4
7700000000023680014
21áâà5,21áâà6,21áâà7,21áâà10,21áâà11
7700000000023680015
21áâà12,21áâà13,21áâà15,21áâà16
7700000000023680016
21áâà17,21áâà18,21áâà20,23,23áâà3,24
7700000000023680017
25,26,27áâà1,27áâà2,27áâà3,27áâà4
7700000000023680018
7700000000023680019
27áâà10,27áâà11,27áâà12,27áâà12
7700000000023680020
27áâà13,27áâà14,27áâà15,27áâà17
7700000000023680021
7700000000023680022
27áâà22,27áâà23,27áâà24,27áâà25
7700000000023680023
27áâà27,27áâà28,27áâà29,27áâà30
7700000000023680024
27áâà32,27áâà35,27áâà36,27áâà37
7700000000023680025
27áâà16,27áâà26
7700000000023680026
7700000000023690001
2,5,9,9áâà1,10,10áâà1,10,12,14/16,15
7700000000023720001
1,3,3áâà2,4,5,6,7,7áâà2,7áâà3,7áâà1,8
7700000000023730001
10,12,12áâà1
7700000000023730002
1ª1,1ª2,1ª3,2áâà1,2áâà2,2áâà3,2áâà4
7700000000023740001
7700000000023740002
2ª5,3ª1,4,4ª2,5ª1,5ª2,5ª3,5ª5,6áâà1
7700000000023740003
6áâà2,7,8,9ª1,9ª2,9ª3,9ª3áâà2,9ª4,10
7700000000023740004
10ª1áâà1,10ª1áâà2,11,13ª1,14,14áâà1
7700000000023740006
14áâà2,15,16,17ª1,17ª2,17ª3,18,19,20
7700000000023740007
27ª1,27ª2,27ª2áâà1
7700000000023740008
21,21áâà1,21,22,23,25
7700000000023740009
24,26,28,29ª1,32,36,37,39ª1,39ª2,39ª3
7700000000023740010
109156
39ª4,40,40áâà1,40áâà2,40áâà3,40áâà4
7700000000023740011
40áâà5,40áâà6,40áâà7,41,42áâà1,58,58áâà2
7700000000023740012
7700000000023740005
45,47ª1,47ª2,49ª1,49ª2,51ª2,56,56áâà1
7700000000023740013
109431
57ª1,57ª2,57ª3,61ª1,61ª2,61ª3,63
7700000000023740014
64áâà1,64áâà2,65ª2,65ª3,65ª4,65/32,70
7700000000023740015
70ª1,70ª2,70ª3,71ª1,71ª2,73ª1,73ª2
7700000000023740016
1,2ª1,2ª2,3,4áâà1,5,6,7áâà1,8,9áâà1,10
7700000000023750001
12,14,16,16áâà2,18,20
7700000000023750002
11áâà1,13áâà1,13ª1,15,17,19,21áâà1
7700000000023750003
21áâà1,23,25,27
7700000000023750004
56,56áâà1
7700000000023760001
3,3,4,5,6,7,9,10,11,12,13,14,15,16
7700000000023760002
18áâà1,18áâà2,19,20,21,22,23,24,25,26
7700000000023760003
27áâà1,27áâà2,28,29,30,32,34,36,38,40
7700000000023760004
42,44,46,48áâà1,48áâà2,50,52,58,60,62,64
7700000000023760005
1,1áâà1,1ª1,3,3áâà1,5,5ª1,7,7ª1,9,9ª1
7700000000023770001
1,3ª1,3ª2,3ª3,7áâà1
7700000000023780001
7700000000023780002
2áâà10,2áâà16,2áâà17,2,4ª2,6,6áâà2
7700000000023780003
6áâà3,6áâà4,6áâà5,6áâà6,6áâà8,6áâà9
7700000000023780004
6áâà10,6áâà12,6áâà13,6áâà14,6áâà15,6ª1
7700000000023780005
7700000000023780006
7700000000023780007
7700000000023780008
3,3áâà1,3áâà2,3,3,3,4,6,7/1,8,8ª1
7700000000023790001
8ª2,9/2,10,10áâà1,10,10,11,11,12ª2
7700000000023790002
12,12áâà7,12áâà13,12,13,13áâà1
7700000000023790003
13áâà2,13áâà3,13,13,14áâà1,14áâà2
7700000000023790004
14áâà3,15/1,16,18
7700000000023790005
2,17,18,19,19,19áâà1,20,20ª1,21
7700000000023790006
21áâà1,21áâà2,22,23,23,23,26,26áâà2
7700000000023790007
26áâà4,26
7700000000023790008
7,7áâà2,7áâà4,7áâà7,7áâà8,7áâà9,7
7700000000023810001
7áâà1,9,10,10áâà1,11
7700000000023810002
1,1ª1,1ª1áâà1,1ª1áâà2,1ª1áâà3,1ª2,1ª3
7700000000023830001
1áâà1,1áâà2,1áâà3,1,2,2áâà1,2ª1,3
7700000000023830002
3áâà1,3áâà2,3ª1,3ª2,3ª2áâà1,3ª2áâà2,4
7700000000023830003
4áâà1,4áâà2,4ª1,4ª2,4ª3,4ª3áâà1,5
7700000000023830004
6áâà,6áâà2,6áâà3,6áâà4,6áâà5,6áâà7
7700000000023830005
6áâà8,6áâà9,6áâà11,6áâà12,6áâà13
7700000000023830006
7700000000023830007
6áâà19,6áâà20,6áâà21,6áâà22,6áâà23
7700000000023830008
6áâà25,6áâà27,6áâà28,6áâà29,6áâà31
7700000000023830009
6áâà32,6áâà33,6áâà35,6áâà37,6áâà38
7700000000023830010
6áâà39,6áâà40,6áâà41,6áâà42,6áâà43
7700000000023830011
6áâà46,6áâà47,6áâà48,6áâà49,6áâà50
7700000000023830012
6áâà51,6áâà52,6áâà53,6áâà54,6áâà55
7700000000023830013
6áâà56,6áâà57,6áâà60,6áâà61,6áâà62
7700000000023830014
6áâà63,6áâà64,6áâà65,7,11áâà1,11áâà2
7700000000023830015
7700000000023830016
7700000000023830017
11áâà14,11áâà16,11áâà17,11_,11áâà1
7700000000023830018
11áâà2,12,12áâà1,12áâà2,13áâà1
7700000000023830019
7700000000023830020
13áâà7,13áâà8,13áâà9,14,15,15áâà1
7700000000023830021
15áâà2,15áâà3,17,17áâà1,17áâà2
7700000000023830022
7700000000023830023
17áâà7,17áâà8,21áâà1,21áâà2
7700000000023830024
21áâà3,21áâà4,21áâà5,21áâà6,23
7700000000023830025
7700000000023830026
7700000000023830027
23áâà11,23áâà12,23áâà13,23áâà14
7700000000023830028
23áâà15,25,25áâà,25áâà,25áâà,25áâà
7700000000023830029
25áâà,25áâà,25áâà,25áâà,25áâà1
7700000000023830030
25áâà2,25áâà3,25áâà4,25áâà5
7700000000023830031
2/12áâà1,2/12áâà2,2/12áâà3,2/12áâà4,3
7700000000023840001
14
7700000000023860001
14/49ª1,14/49ª2,14/49ª3,16ª1,16ª1áâà2
7700000000023860002
16ª2,16ª3,16,16áâà2,16áâà4,16áâà5
7700000000023860003
18,18ª1,18ª2,18ª3,18ª4,20ª1,20ª1áâà4
7700000000023860004
20ª2,20ª2áâà2,22,22áâà2,22áâà3,23,23
7700000000023860005
23áâà1,23,24,24áâà2,25,26ª1,26ª2
7700000000023860006
26ª3,26ª4,27,28,29,29áâà2,31,32,33ª1
7700000000023860007
33ª1áâà2,33ª2,33ª3,33ª4,33,35,37,39
7700000000023860008
41,43ª1,43ª2,43ª2áâà2,43ª2áâà3,43ª3,45
7700000000023860009
30,30áâà2,30áâà3,30áâà4,30áâà5,30áâà6
7700000000023860012
30áâà7,30áâà9,30áâà11,30áâà12,30áâà13
7700000000023860013
30áâà14,30áâà15,30áâà16,30áâà17
7700000000023860014
30áâà18,30áâà20,30áâà21,30áâà22
7700000000023860015
1,1áâà2,1áâà3,1áâà4,1áâà5,2,2,3,4,6ª1
7700000000023860017
6ª2,6ª2áâà2,6ª3,7,7áâà2,7ª3,8ª1,8ª2
7700000000023860018
8ª2áâà2,8ª2áâà3,10,10áâà1,10,12/25
7700000000023860019
12,13,17ª1,17ª1áâà2,17ª1áâà3,17ª3
7700000000023860020
19ª1,19ª2,19ª3,21ª2,21ª2áâà2,21/24
7700000000023860021
7700000000023880001
3,3áâà2,3áâà3,3,3áâà2,3áâà3,3áâà4
7700000000023880002
3,3áâà2,3áâà3,3áâà4,3áâà5,5áâà1
7700000000023880003
5áâà2,5áâà3,5áâà4,7áâà8,7áâà9
7700000000023880004
13,15ª1,15ª2
7700000000023890001
1,3,3áâà2,5,7áâà1,7áâà2,7áâà3,7áâà4
7700000000023890002
7700000000023890003
7700000000023890004
7700000000023890005
7áâà21,9,11,11áâà2
7700000000023890006
2,2áâà1,2áâà2,4,4áâà2,6,6áâà1,8,10ª1
7700000000023890007
10ª2,10ª3,10ª4,10áâà1,12ª1,12ª2,12ª3
7700000000023890008
14ª1,14ª1áâà1,14ª1áâà2,14ª2,14ª3
7700000000023890009
3_5áâà1,3_5áâà2,3_5áâà3,4,6,7,8/2áâà1
7700000000023910001
8/2áâà2,8/2áâà3,8/2áâà4,9áâà1,11
7700000000023910002
11áâà2,14/1áâà1
7700000000023910003
3,3áâà,3áâà3,3áâà4,5/9
7700000000023920001
7/12,9,9,9áâà2,11/11,13/12,15,15ª1
7700000000023920002
15,17áâà4,17ª1,17ª1áâà2,17ª2,17ª3,19
7700000000023920003
83ª1,83ª2,83ª2áâà1,83ª3,83,83
7700000000023920004
83áâà1,85ª1,85ª1áâà1,85ª2,85ª2áâà1
7700000000023920005
87/49,91,91áâà1,91áâà2,91áâà3,91ª1
7700000000023920006
91ª2,91ª3,91ª4,91ª4áâà1,91ª4áâà2
7700000000023920007
91ª4áâà3,93,93ª1,93ª2,93ª3,93ª3áâà1
7700000000023920008
93ª3áâà2,93ª3,93ª4,93ª4áâà1,93
7700000000023920009
93áâà1,93áâà2,93áâà3,93,97,97áâà2
7700000000023920010
97ª1,99,99áâà2,101ª1,101ª2,101ª2áâà2
7700000000023920011
101ª2áâà3,101ª3,101,103,105,107
7700000000023920012
107áâà1,107
7700000000023920014
2/22,2/22áâà1,4,4áâà1,4ª4,8ª1,8ª2
7700000000023920015
8ª2áâà1,8ª2áâà3,12,12áâà2,16/10,18ª1
7700000000023920016
18ª2,18ª2áâà1,18ª2áâà2,20/9,22/10ª1
7700000000023920017
22/10ª2,24ª1,24ª2,24ª3,24ª4,26/44
7700000000023920018
122,124,124,126,126áâà6,126áâà7
7700000000023920019
126áâà8,126ª1,126ª2,126ª3,128,128áâà1
7700000000023920020
128ª1,128ª1áâà1,128ª1áâà2,128ª2,128ª3
7700000000023920021
130ª1,130ª2,130ª2áâà1,130ª3,130ª3áâà1
7700000000023920022
130ª4,130ª4áâà1,130ª4áâà2,130,130
7700000000023920023
132ª1,132ª2,132ª2áâà1,132ª3,132ª4
7700000000023920024
132ª4áâà1,132ª5,132ª6,132ª7,132ª8
7700000000023920025
132ª8áâà2,132ª9,136ª1,136ª2,136ª2áâà1
7700000000023920026
136ª2áâà2,136ª3,136ª3áâà1,136ª3áâà2
7700000000023920027
136ª3áâà3,136ª4,136ª4áâà1,136ª5,138
7700000000023920028
138áâà1,140,140áâà1,140ª1,140ª2,140ª3
7700000000023920029
140ª4,140ª5,140ª5áâà2,140ª6,140,140
7700000000023920030
142,142ª1,142ª1áâà1,142ª1áâà2,142ª2
7700000000023920031
142ª2áâà1,142ª3,142ª4,142ª4áâà1
7700000000023920032
142ª4áâà2,142ª5,144,144áâà1,144,146ª1
7700000000023920033
146ª1áâà1,146ª2,146ª2áâà1,146ª2áâà2
7700000000023920034
146ª3,150áâà1,150áâà2,152áâà1,152ª1
7700000000023920035
152ª2,152ª2áâà2,152ª2áâà4,152ª3,152ª4
7700000000023920036
152,152,154,154áâà1,154áâà2,154áâà4
7700000000023920037
154ª1,154ª2,154ª2áâà1,154ª3,154ª3áâà1
7700000000023920038
154ª4,154ª5,154ª5áâà1,154ª5áâà2,154ª6
7700000000023920039
154ª7,154ª7áâà1,154ª8,154,154áâà1
7700000000023920040
154áâà2
7700000000023920041
28/53,30ª1,30ª2,30ª3,30ª3áâà2,30ª4
7700000000023920042
32ª1,32ª2,32ª2áâà1,34ª1,34ª2,36ª1,38ª1
7700000000023920043
38ª1áâà2,38ª2,40ª1,40ª2,42ª1,42ª2
7700000000023920044
42ª2áâà3,42ª3,42ª3áâà1,42ª4,42ª4áâà1
7700000000023920045
44ª1,44ª1áâà1,44ª2,44ª3,44ª3áâà1,44ª4
7700000000023920046
44ª5,44ª6,44ª7,46ª1,46ª1áâà1,46ª2,46ª3
7700000000023920047
48ª1,48ª2,48ª3,48ª4,52,52áâà1,54
7700000000023920048
7700000000023920049
65áâà6,65áâà7,65áâà8,67,67áâà1,67áâà1
7700000000023920050
67áâà2,69,71,73,75ª1,75ª2,75ª2áâà2
7700000000023920051
75ª3,75ª4,77,79
7700000000023920052
56,58ª4,58ª4áâà1,58ª4áâà2,58ª4áâà3
7700000000023920053
58/32ª1,58/32ª2,60,60áâà1,60ª1,60ª2
7700000000023920054
60,62,62ª4,62ª5,62,64,64,66áâà1
7700000000023920055
66áâà2,66áâà3,66áâà4,66áâà5,66áâà6
7700000000023920056
66áâà7,66áâà8,66áâà9,66áâà10,70áâà1
7700000000023920057
70áâà2,74,74áâà1,74áâà2,74áâà3,74áâà4
7700000000023920058
74áâà5,74áâà6,74áâà7,74áâà8,74áâà9
7700000000023920059
74áâà10,74áâà11,74,76,76áâà1,78áâà1
7700000000023920060
78áâà2,78áâà3,78áâà4,78áâà5,78áâà6
7700000000023920061
78áâà7,78áâà8,78áâà9,78áâà10,78áâà11
7700000000023920062
78áâà12,78áâà13,78áâà1,78áâà2
7700000000023920063
78áâà3,78áâà4,78áâà5,78áâà6
7700000000023920064
23,25,25ª1áâà1,25ª1áâà2,25ª1áâà3,25ª4
7700000000023920065
27ª1,27ª1áâà1,27ª2,27ª2áâà1,27ª2áâà3
7700000000023920066
27ª3,27ª4,27ª5,27ª6,27ª6,27ª7,29ª1
7700000000023920067
29ª2,29ª3,31áâà1,31ª2,31ª3,31ª4,31ª5
7700000000023920068
33áâà1,33ª1,33ª2,33ª3,33ª3áâà1,33ª4,37
7700000000023920069
41,41áâà1,43ª1,43ª2,43ª2áâà1,43ª2áâà2
7700000000023920070
43ª2áâà3,43ª2áâà4,45,45ª1,45ª2,45,47
7700000000023920071
47ª2,47ª2áâà1,49,51,53,55
7700000000023920072
7700000000023920073
59,59áâà1,59áâà2,59áâà3,59áâà4,59áâà5
7700000000023920074
59áâà6,59áâà7,59áâà8,59ª1,59ª2,59,61
7700000000023920075
61ª1,61ª1áâà1,61,61áâà1
7700000000023920076
104,104/47,108,110ª1,110ª2,110ª3,110ª4
7700000000023920077
110ª4áâà1,110ª4áâà2,110ª5,110,112
7700000000023920078
112áâà1,114,114áâà1,114ª1,114ª2,114ª3
7700000000023920079
114ª4,114ª4áâà1,114ª4áâà2,114ª5,114ª6
7700000000023920080
116,116ª1,116ª2,116ª3,116ª3áâà1
7700000000023920081
78áâà7,80,80ª1,80ª2,82,82ª1,82ª1áâà1
7700000000023920082
116ª3áâà2,118áâà1,118ª1,118ª1áâà1
7700000000023920083
156ª1,156ª1áâà1,156ª1áâà2,156ª2,156ª3
7700000000023920084
117465
156ª4,156ª5,156ª5áâà1,156ª5áâà2,156ª6
7700000000023920085
158áâà1,160,160áâà1
7700000000023920086
84/32áâà1,84/32áâà2,84/32áâà3
7700000000023920087
84/32áâà4,84/32áâà5,84/32áâà6
7700000000023920088
84/32áâà7,84/32áâà8,84/32áâà9
7700000000023920089
84/32áâà10,84/32áâà11,84/32áâà12
7700000000023920090
84/32áâà13,84/32áâà14,84/32áâà15
7700000000023920091
84/32áâà16,84/32ª1,84/34áâà13,84áâà1
7700000000023920092
7700000000023920093
82
7700000000023920094
118ª2,118,118,118áâà1
7700000000023920095
84áâà2,84áâà3,86áâà1,86áâà2,86áâà3
7700000000023920096
86áâà5,86áâà6,86áâà8,86áâà9,86áâà10
7700000000023920097
86áâà11,86áâà12,88/20,88,88,90,92
7700000000023920098
92áâà1,94,94áâà1,94ª2,94ª2áâà1,96,96ª1
7700000000023920099
96ª2,96ª3,96ª3áâà1,96ª4,96ª5,96ª6,96ª7
7700000000023920100
96,98ª1,98ª2,98ª3,98ª4,98ª5,98ª5áâà1
7700000000023920101
98ª6,98ª7,98ª8,98ª9,98ª10,98ª11
7700000000023920102
82áâà1
7700000000023920013
129áâà1,129,131,131áâà1,133
7700000000023920103
98ª11áâà1,98ª11áâà2,98ª11áâà3,98ª12
7700000000023920104
109,109áâà2,109áâà3,109ª2,109áâà1
7700000000023920105
109áâà2,109áâà4,111ª1,111,111áâà1
7700000000023920106
111áâà2,111áâà3,113ª1,113ª2,113ª3
7700000000023920107
115áâà1,115ª1,115ª2,115ª2áâà1
7700000000023920108
98ª12áâà1,98ª12áâà2,98,98,98,100
7700000000023920109
123,123áâà1,123áâà2,123áâà3,123áâà1
7700000000023920110
123áâà2,123áâà3,123áâà4,123áâà5
7700000000023920111
123áâà6,123áâà7,123áâà8,123áâà9
7700000000023920112
123áâà10,123áâà11,123áâà12
7700000000023920113
123áâà13,123áâà14,123áâà15
7700000000023920114
123áâà16,123áâà17,123áâà18
7700000000023920115
123áâà19,123áâà20,123áâà21
7700000000023920116
123áâà22,123áâà23,123ª25,123ª26
7700000000023920117
123ª27,123,125,125áâà1,125ª1
7700000000023920118
133áâà1,135áâà1,137áâà1,137áâà2
7700000000023920119
127áâà3,127áâà4,127áâà5,127áâà9
7700000000023920120
127áâà10
7700000000023920121
1,2,2áâà1,3,4,4áâà2,5,5áâà2,6,6áâà1
7700000000023930001
7ª1,7ª1áâà1,7ª1áâà2,7ª2,7ª3,8,9,9áâà1
7700000000023930002
10ª1,10ª1áâà2,10ª2,10ª2áâà1,12,12áâà1
7700000000023930003
16,16áâà1,16áâà2,17,17
7700000000023930004
1/26,2,3,4_4,4_4áâà1,4_4áâà2
7700000000023970001
4_4áâà3,5,6/33áâà1,6/33áâà2,7
7700000000023970002
8/36áâà2,9áâà1,9áâà2,9áâà1,10,10áâà1
7700000000023970003
7700000000023970004
7700000000023970005
7700000000023970006
7700000000023970007
7700000000023970008
10áâà24,10áâà25,10áâà26,10áâà27
7700000000023970009
7700000000023970010
10áâà32,11,13,13áâà1,15,16áâà1,16áâà2
7700000000023970011
16,17,18áâà1,18áâà13,20,22áâà1,22áâà2
7700000000023970012
24áâà1,24áâà4,26/21áâà1,26/21áâà10
7700000000023970013
26/21áâà15,28/24áâà2,28/24áâà6,30,32
7700000000023970014
34,34áâà3,34,36áâà1,38áâà1,40,42
7700000000023970015
3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000023980001
3áâà6,3áâà9,3áâà1,3áâà2,3áâà3,9
7700000000023980002
9ª1,10,10áâà1,10áâà2,10áâà3,11
7700000000023980003
11áâà1,12,13,13áâà1,13áâà5,13áâà6
7700000000023980004
13áâà7,13áâà8,13áâà11,13áâà14,13áâà44
7700000000023980005
13áâà47,13áâà48,13áâà50,13áâà51,13áâà56
7700000000023980006
3,5,6,7,7,8,9,10,10áâà1,11,12,12áâà1
7700000000023990001
7700000000024000001
3ª1,3ª2,3,3,4,5,6,7,8,8áâà4,9,10
7700000000024000002
1,3,4ª1,4ª2,4ª3,5,6,6,6áâà1,7,8,8ª2
7700000000024010001
10,10áâà3,11,13ª1,13ª2,13ª3,14áâà4
7700000000024010002
14ª1,14ª2,14ª3,15,15,16,16,17,18
7700000000024010003
1,4áâà1,4áâà2,4áâà4,8áâà3
7700000000024030001
3áâà1,5áâà1,12áâà1
7700000000024040001
2,2áâà2,2ª1,2ª2,2ª3,3,3áâà1,3áâà2
7700000000024050001
3áâà3,3áâà4,3áâà5,3áâà6,3áâà7,3
7700000000024050002
3áâà1,3,4,4áâà1,5áâà1,5áâà2,5áâà3
7700000000024050003
5,6,6áâà5,8,8,8áâà3,10,12,12áâà2
7700000000024050004
14áâà3,14áâà6,14áâà7,14áâà11,14áâà18
7700000000024050005
14ª1,14ª2,17,19,19áâà4,19áâà5,19áâà6
7700000000024050006
19áâà8,19áâà10,19áâà11,19áâà12,19áâà14
7700000000024050007
19áâà14,19áâà17,19áâà20,19áâà22
7700000000024050008
7700000000024050009
19áâà5,19áâà7,19áâà8,19áâà9
7700000000024050010
19áâà10,19áâà12,19áâà13,19áâà14
7700000000024050011
19áâà16,19áâà17,19áâà18,19áâà19
7700000000024050012
19áâà20,19áâà21,19áâà22,19áâà23
7700000000024050013
19áâà24,19áâà26,19áâà28,19áâà29
7700000000024050014
19áâà30,19áâà27,19áâà28,19áâà29
7700000000024050015
19,19áâà1,19áâà2,19áâà3,21,23áâà2
7700000000024050016
23,23áâà1,23áâà2,23áâà3,23áâà4,29
7700000000024050017
31,31áâà8,31áâà9,31áâà10,31áâà16,31
7700000000024050018
7700000000024050019
31áâà5,37,37áâà3,37áâà6,37áâà7,37áâà8
7700000000024050020
37áâà9,37áâà10,37áâà11,37,37áâà1
7700000000024050021
7700000000024050022
7700000000024050023
39áâà11,39áâà2
7700000000024050024
ª1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà6
7700000000024060001
2ª1,2ª1áâà1,2ª1áâà2,2ª1áâà4,2ª2
7700000000024060002
2ª2áâà1,2ª2áâà2,2ª3,2,2,4,5ª1,5ª3
7700000000024060003
5ª3áâà1,5ª3áâà2,5ª4,6,7ª1,7ª1áâà1
7700000000024060004
7ª1áâà2,7ª2,8,8áâà1,8,9ª1,9ª2,9ª2áâà1
7700000000024060005
10ª1,10ª1áâà1,10ª1áâà2,10ª2,11,11áâà1
7700000000024060006
12áâà1,12ª1,12ª2,12ª2áâà1,12ª3,12ª4,13
7700000000024060007
7700000000024060008
6,8,13áâà1,13áâà2,13áâà3,13áâà4,17áâà1
7700000000024070001
7700000000024070002
17áâà7,17áâà8,25,25áâà1,27,31,31áâà1
7700000000024070003
31áâà2,31áâà3
7700000000024070004
4ª1,4ª2,4ª2áâà1,6,6ª1,6ª2,6ª2áâà1,6
7700000000024080001
8áâà1,8áâà3,8ª1,8ª2,8ª2áâà1,8ª3,8ª4
7700000000024080002
8ª5,8ª6,10,10ª1,10ª2,10ª2áâà1,10ª2áâà2
7700000000024080003
12,12áâà1,12áâà2,12ª1,12ª2,12,12,14
7700000000024080004
14ª1,14ª2,14ª3,14ª4,14ª5
7700000000024080005
3,3ª1,5áâà1,5ª1,7,7ª1,7ª1áâà1,9ª1,11
7700000000024080006
13,13áâà2,19áâà1
7700000000024080007
2,4,5,7,8,8áâà2,9,11,11áâà3,13
7700000000024090001
7700000000024090002
3,4,4áâà1,4,4ª1,5,6ª1,6ª2,6ª2áâà2
7700000000024100001
6ª3,7,7áâà1,7,7áâà1,7áâà2,7áâà3,9
7700000000024100002
9áâà1,9áâà2,11,11áâà1,13,13áâà1,17,19
7700000000024100003
4áâà1,4áâà2,4áâà3,4áâà5,4ª1,4ª2,4ª3,4
7700000000024110001
4,6,6áâà1,6áâà2,6áâà5,7,8áâà1,8áâà2
7700000000024110002
8áâà3,9,11,11áâà63,13,15ª1,15ª2,17
7700000000024110003
19ª1,19ª2,19ª3,21/7
7700000000024110004
1/60,3áâà2,3ª1,3ª2,3ª3
7700000000024110005
7700000000024120001
1áâà7,1áâà8,1áâà9,2,3áâà1,4,6,8,9áâà1
7700000000024120002
9áâà2,9áâà3,9áâà4,9áâà1,9áâà2
7700000000024120003
9áâà1,9áâà2,10,10,11,11ª1,12,12áâà1
7700000000024120004
13áâà1,13áâà3,13áâà4,13áâà5,13áâà6,14
7700000000024120005
14ª1,14ª2,15,15áâà1,15áâà2,15áâà3
7700000000024120006
15áâà4,15áâà1,15áâà2,15áâà3,15,16
7700000000024120007
18,20áâà1,20áâà2,20áâà3,20ª1,20ª2,22
7700000000024120008
22,22áâà1,24,26,26ª2,26ª2áâà1
7700000000024120009
26ª2áâà2,26,26áâà1,28,30,32,34
7700000000024120010
34áâà2,34,36,36áâà1,38,38,40ª1
7700000000024120011
40ª1áâà2,40ª2,40ª3,42,42áâà1,44,50,52
7700000000024120012
4áâà4,4ª4,6,6áâà1
7700000000024130001
7700000000024140001
125627
7áâà2,7/5áâà3,7/5áâà4,7/5áâà4,7/5áâà5
7700000000024160001
9/6áâà1,11,11áâà2,15
7700000000024160002
7700000000024160003
6áâà1,6áâà2,8áâà1,8áâà2,8áâà3,8áâà3
7700000000024190001
2,2áâà2,5
7700000000024200001
1,3áâà1,5áâà1,5áâà2,5áâà3,6,7áâà1
7700000000024210001
7áâà2,7áâà1
7700000000024210002
5,5áâà1,5áâà2,5áâà3,5áâà5,5áâà10
7700000000024230001
7,7áâà2,7áâà3,21áâà1,21áâà2
7700000000024230002
1/2áâà1,2/38áâà1,2/38áâà2,2/38áâà3
7700000000024250001
3/4áâà1,3/4áâà2,4áâà4,4/2áâà1,4/2áâà5
7700000000024250002
4/2áâà8,4/2áâà9,5áâà1,6/1áâà1,6/1áâà3
7700000000024250003
6/1áâà8,6/1áâà9,7áâà1,7áâà2,7áâà5
7700000000024250004
7áâà6,7áâà6,8,10áâà1,10áâà2,10áâà6
7700000000024250005
12áâà1,12áâà2,12áâà3,12áâà4,12áâà7
7700000000024250006
13áâà1,13áâà2,14áâà1,14áâà2,14áâà6
7700000000024250007
14áâà10,14áâà12,14áâà13,15,16áâà1
7700000000024250008
16áâà3,16áâà6,16áâà9,16áâà11,16áâà12
7700000000024250009
16áâà13,17/4áâà1,17/4áâà2,17/4áâà3
7700000000024250010
17/4áâà4,18áâà1,18áâà3,18áâà4,18áâà5
7700000000024250011
18áâà6,19áâà1,19áâà2,19áâà3,19áâà4
7700000000024250012
20áâà1,20áâà2,20áâà3,21áâà1,21áâà2
7700000000024250013
22áâà1,22áâà2,23áâà2,24,24áâà1,24áâà4
7700000000024250014
25áâà1,25áâà1,26,26áâà1,26áâà1
7700000000024250015
67áâà1,69,71/5áâà1,71/5áâà2,71/5áâà3
7700000000024250016
71/5áâà4,71/5áâà5,71/5áâà6,71/5áâà8
7700000000024250017
71/5áâà9,71/5áâà10,71/5áâà14,73
7700000000024250018
9/28áâà1,9/28áâà2,9/28áâà3,11/23áâà1
7700000000024250019
29,52áâà1,52áâà2,53/18áâà1,53/18áâà2
7700000000024250020
53/18áâà4,54,54áâà1,54áâà2,55/25áâà1
7700000000024250021
55/25áâà4,56áâà1,56áâà4,57áâà1,57áâà2
7700000000024250022
57/20áâà2,58áâà1,58áâà5,59áâà2
7700000000024250023
59/19áâà5,60,61,62,62áâà3,62áâà7
7700000000024250024
64áâà1,65/10,66áâà1,66áâà2,66áâà5
7700000000024250025
68áâà1,68áâà2,70/41,74áâà1,74áâà2
7700000000024250026
74áâà3,74áâà4,74áâà5,74áâà6,74áâà7
7700000000024250027
74áâà8,74áâà9,74áâà10,74áâà11,74áâà12
7700000000024250028
74áâà13,74áâà14,76,82/34áâà1,82/34áâà2
7700000000024250029
28,30áâà1,30áâà2,30áâà3,30áâà4,31áâà1
7700000000024250030
31áâà2,31áâà3,31áâà5,31áâà7,31áâà16
7700000000024250031
33_35áâà1,33_35áâà2,33_35áâà3
7700000000024250032
33_35áâà4,34,36,37,37áâà2,39,39áâà2
7700000000024250033
40áâà1,40áâà3,40_42áâà1,41áâà1,41áâà2
7700000000024250034
27áâà1,27áâà3
7700000000024250035
42,42áâà1,43áâà1,43áâà3,44áâà1,44áâà2
7700000000024250036
44áâà3,45,46áâà1,46áâà2,46áâà3,46áâà4
7700000000024250037
46áâà6,47áâà1,47áâà2,47áâà3,47áâà4
7700000000024250038
47áâà7,48áâà1,48áâà2,48áâà3,48áâà4
7700000000024250039
50/2áâà2,50/2áâà5,51áâà2,51áâà4
7700000000024250040
51/14áâà1,51/14áâà3
7700000000024250041
2,3,3áâà3,4áâà1,5áâà1,7áâà1,7áâà2
7700000000024260001
8áâà1,8áâà2,10áâà1
7700000000024260002
6áâà1,6áâà1,6ª6áâà1,7ª3
7700000000024270001
123464
1,24áâà1,24áâà6,24áâà7,24áâà8,24áâà9
7700000000024270002
24áâà10,24áâà11,24áâà22,24áâà24,26áâà2
7700000000024270003
28áâà1,32,32áâà1,32áâà2,32áâà3,32áâà4
7700000000024270004
32áâà5,32áâà6,32áâà7,32áâà8,32áâà9
7700000000024270005
32áâà10,32áâà11,32áâà12,32áâà14
7700000000024270006
32áâà15,32áâà16,32áâà17,32áâà21,34áâà1
7700000000024270007
36,36áâà1,36áâà2,36ª1,36ª1áâà1,36ª2
7700000000024270008
36ª3,38,38áâà1,38áâà2,38ª1,38ª1áâà1,40
7700000000024270009
40áâà1,40ª1,40ª2,41,41áâà1,41áâà2,41ª1
7700000000024270010
42,42áâà1,42ª1,42ª2,43,43áâà1,43ª1
7700000000024270011
43ª2,45,45áâà1,45ª1,45ª2,47,49,51,52
7700000000024270012
19,19áâà1,19áâà2,19áâà3,19áâà4,19áâà5
7700000000024270013
19áâà6,19áâà7,19áâà8,19áâà9,21,21áâà1
7700000000024270014
23,23áâà1,23ª1,23ª2,23ª2áâà1,23áâà1
7700000000024270015
25,25ª1,25ª1áâà1,25ª1áâà2,25ª2,25ª3,27
7700000000024270016
27ª1,27ª1áâà2,27ª2,27ª2áâà1,29,29áâà1
7700000000024270017
29áâà5,29ª1,29ª2,29ª3áâà1,29ª3áâà2
7700000000024270018
29ª4,29ª5,31,31áâà1,31áâà4,31ª1
7700000000024270019
31ª1áâà2,31ª2,33,33ª1,35,35áâà1,35áâà2
7700000000024270020
35ª1,35ª2,37,37áâà2,37áâà3,37ª1,39
7700000000024270021
39áâà1,39áâà2
7700000000024270022
2,2áâà1,2áâà3,3,4áâà1,6,6áâà1,6áâà1
7700000000024270023
6áâà1,6áâà1,6áâà1,6áâà1,6áâà1
7700000000024270024
6áâà1,6áâà1,6ª1,6ª3,6ª3áâà2,6ª4,6ª5
7700000000024270025
6ª6,6ª6áâà2,6ª7,6ª8,7,7áâà1,7áâà2,7ª1
7700000000024270026
7ª2,8,8áâà2,8,9,9ª1,9ª1áâà2,10,10áâà1
7700000000024270027
11,11ª1,11ª1áâà1,11ª1áâà4,12ª1,12ª2
7700000000024270028
12ª2áâà1,12ª3,13,13áâà1,13ª1,13,14,15
7700000000024270029
15áâà1,15áâà2,15ª1,15ª1áâà1,15ª1áâà2
7700000000024270030
15ª2,15ª3,15ª3áâà1,15ª3áâà2,15ª4,16
7700000000024270031
16áâà1,16áâà2,16ª1,16ª3,16ª4,16ª5
7700000000024270032
17áâà4,17ª1áâà1,17ª1áâà2,18,20,20áâà1
7700000000024270033
52ª1,52ª1áâà1,52ª1áâà2,52ª1áâà3
7700000000024270034
52ª1áâà4,54,54ª1,54ª2áâà2,54ª2áâà3
7700000000024270035
58áâà1,58áâà2,58áâà3,58áâà4,58áâà5
7700000000024270036
7700000000024270037
7700000000024270038
7700000000024270039
7700000000024270040
58áâà23,58áâà24,58áâà25,58áâà26,60
7700000000024270041
2,2ª1,2ª2,2ª3,2ª3áâà1,2_,2áâà1
7700000000024280001
2áâà2,4,4áâà2,6,6ª1,6ª2,7,8,8áâà1,9
7700000000024280002
9áâà1,9ª1,9ª1áâà1,9ª2,10,11,12áâà1
7700000000024280003
12áâà2,12áâà3,12áâà4,12áâà6,12áâà7,13
7700000000024280004
14,15,17,19,19ª1,19ª2,19ª2áâà1
7700000000024280005
19ª2áâà2,19,21,21,21áâà1,21áâà2,23
7700000000024280006
23ª1,23ª2,25,25ª1,27,27ª1,27ª1áâà1
7700000000024280007
27ª1áâà2,27ª2,29,29
7700000000024280008
3/5,4,4áâà2,4,6áâà3,6ª1,6,8,10
7700000000024290001
12áâà1,12áâà2,13,13áâà2,13áâà3,14,16
7700000000024290002
16áâà2,20,25,29áâà1,29áâà3,29
7700000000024290004
30áâà1,30áâà2,33,34áâà1,34áâà2,35,35ª2
7700000000024290005
37,38,53áâà1,53áâà2,78áâà1,78áâà2
7700000000024290006
7700000000024290007
84áâà1,84áâà2,84áâà3,84áâà4,84áâà5
7700000000024290008
84áâà6,84áâà7,84áâà8,84áâà9,84áâà13
7700000000024290009
84áâà14,84áâà15,84áâà16,84áâà18
7700000000024290010
84áâà19,84áâà20,84áâà24,84áâà25
7700000000024290011
84áâà26,84áâà27,89áâà1,89áâà2,89áâà3
7700000000024290012
91áâà2,91áâà3,91áâà4,93áâà1,93áâà2
7700000000024290013
93áâà3,93áâà4
7700000000024290014
29áâà2
7700000000024290003
1áâà1,1áâà2,2,3,4/27,5,6/32,7,8,9,10
7700000000024310001
7700000000024310002
1,3,5,5áâà2,7,9,9áâà2,11,11áâà2
7700000000024330001
2,4,6,8,9,9áâà3,10,12
7700000000024340001
2,3,4,5áâà1,5ª1,5ª2,5ª3,7,8,8,9,10,11
7700000000024350001
11áâà2,13,15áâà2,17,17áâà2
7700000000024350002
5áâà3,5áâà4,5áâà5,7áâà1,11áâà1,11áâà2
7700000000024360001
11áâà3,11áâà4,11áâà5,13,13,15,17ª4
7700000000024360002
17ª5,17ª6,17ª8,17ª10,17ª11,17ª12
7700000000024360003
17ª14,23/9áâà1,23/9áâà1,23/9áâà2
7700000000024360004
2áâà1,2áâà2,2áâà3,6/4áâà1,10áâà1
7700000000024360005
10áâà2,10áâà2,10áâà3,10áâà4,10áâà5
7700000000024360006
10áâà7,10áâà8,10áâà9,10ª1,10áâà1
7700000000024360007
10áâà2,12áâà1,12áâà2,12áâà3,12áâà4,14
7700000000024360008
14áâà1,14áâà2,18,20,20áâà2,22,24ª1
7700000000024360009
24ª2,24ª3
7700000000024360010
2,2ª1,3,3ª1,5,5áâà1,5ª1,6/7,7,7áâà1,8
7700000000024390001
8áâà1,8áâà2,9,10,10ª1,10ª1áâà1
7700000000024390002
10ª1áâà2,10ª1áâà3,10,11,11áâà1,12
7700000000024390003
12áâà1,12áâà2,12ª1,12ª3,13,13ª1,13ª2
7700000000024390004
13ª3,13ª4,13ª5,14ª4áâà1,15,15ª1
7700000000024390005
15ª1áâà1,15ª2,15ª3,15ª4,15ª5,15ª6,16
7700000000024390006
7700000000024390007
7700000000024390008
7700000000024390009
7700000000024390010
16áâà19,16áâà20,16áâà21,16áâà22
7700000000024390011
16áâà23,16áâà24,16áâà25,16ª1áâà1,16ª3
7700000000024390012
16ª3,16ª4,16ª5,16ª6,16ª8,16ª12,17
7700000000024390013
17ª1,17ª2,17ª3,17ª4,17ª4áâà1,17ª5,17ª6
7700000000024390014
17ª7
7700000000024390015
2áâà3,2/1áâà1,2/1áâà2,2/1áâà3,2/1áâà4
7700000000024410001
2/1áâà5,2/1áâà6,4áâà1,4áâà2,4áâà3
7700000000024410002
7700000000024410003
8áâà3,8áâà4,12/19áâà1,14,14áâà2,16áâà1
7700000000024410004
16áâà2,18áâà1,18áâà2,20áâà2,20,22
7700000000024410005
22áâà3,22áâà4
7700000000024410006
1/2,3áâà1,3áâà2,3áâà3,5,5áâà1,5áâà4
7700000000024410007
5áâà5,5áâà6,7áâà1,7áâà2,7áâà3,7áâà4
7700000000024410008
9áâà4,9_9áâà2,9áâà1,9áâà2,11áâà1
7700000000024410009
11áâà2,11áâà3,11áâà4,13áâà1,13áâà2
7700000000024410010
13áâà3,13_15,15áâà1,15áâà2,15áâà3
7700000000024410011
15áâà4,17/2áâà1,17/2áâà2,19/3áâà1
7700000000024410012
2áâà1,2áâà2,2áâà3,3,5áâà1,5áâà2,5áâà3
7700000000024420001
10áâà1,10áâà2,10áâà3,10áâà4,12áâà1
7700000000024420002
12áâà2,14/2áâà1,14/2áâà2
7700000000024420003
3ª1,3ª2,4ª1,4ª2,5,5ª1,5ª1áâà1,5ª2,6
7700000000024430001
6áâà1,6áâà2,7,7áâà1,8,9ª1,9ª2,10,11
7700000000024430002
12ª1,12ª2,12ª2áâà1,13,13áâà1,14ª1,14ª2
7700000000024430003
14ª3,15ª1,15ª2,15ª3,15ª3áâà1,16,16áâà2
7700000000024430004
16áâà3,16áâà4,17,22ª1,24,24,26
7700000000024430005
3,3áâà2,4,4áâà1,4áâà2
7700000000024440001
7700000000024450001
4,4áâà1,8,10,10áâà2,12,14,16,16áâà1
7700000000024470001
17,17áâà1,17áâà3
7700000000024470002
1,3,5,7,9ª1,9ª2,11ª1,11ª2,13ª1,13ª2,15
7700000000024470003
15áâà2
7700000000024470004
3,3áâà1,3áâà3,4,5,5ª1,5ª2,5,5,6ª1
7700000000024480001
6ª2,6ª2áâà1,6ª2áâà2,7ª1,7ª1áâà1,7ª2
7700000000024480002
7ª3,8ª1,8ª2,8ª2áâà1,9ª1,9ª1áâà1
7700000000024480003
9ª1áâà2,9ª2,9ª3,9ª3áâà2,9ª3áâà3
7700000000024480004
9ª3áâà4,9ª4,9ª4áâà1,11ª1,11ª2,11ª3,12
7700000000024480005
12áâà2,13ª1,13ª2,13ª3,14ª1,14ª2
7700000000024480006
14ª2áâà2,15ª1,15ª1áâà1,15ª2,16,16áâà1
7700000000024480007
17ª1,17ª2,18,19,20,21,23,23áâà2,25
7700000000024480008
25ª1,25ª2,25ª3,25ª3áâà1,25ª4,27,27áâà1
7700000000024480009
14,14,17,19,24
7700000000024490001
1,1áâà2,1,1áâà2,3,3áâà1,4,5,6,7
7700000000024510001
7áâà2,8,9,9áâà2,10,10áâà3,10áâà4
7700000000024510002
10áâà5,10áâà6,10áâà9,11,11áâà2,11,12
7700000000024510003
12áâà4,12áâà8,13,14,16,16áâà2
7700000000024510004
16/26áâà1,16/26ª1,16/26ª2,16/26ª3,20
7700000000024510005
20áâà1,20áâà2,22ª1,22ª2,22ª2áâà1,22
7700000000024510006
22áâà2,22,23,24áâà4,24,25,25áâà2
7700000000024510007
25áâà3,26/29,26/29áâà2,30,30áâà2,33ª1
7700000000024510008
33ª2
7700000000024510009
34áâà14,34ª1,34ª2,34ª3,34ª3,34ª3
7700000000024510010
34ª4,34ª6,34ª7,34ª8,34ª9,34ª12,34ª13
7700000000024510011
34ª13,34ª13,34ª13,34ª16,34ª16
7700000000024510012
34ª20,34ª21,34ª22,34ª30,34ª31,34ª33
7700000000024510013
34ª36,34ª37,34ª38,34ª40,34ª42,34ª44
7700000000024510014
34ª45,34ª47
7700000000024510015
26áâà1,26áâà2,28,32ª1,32ª1áâà2,34
7700000000024520001
1,1,2,2áâà1,3,3áâà1,3ª2,3ª2áâà1,3ª3
7700000000024520002
3ª3áâà4,3ª4,3ª5,3,4áâà5,4ª1,4ª2,4ª3
7700000000024520003
4ª4,5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000024520004
7700000000024520005
5áâà12,5áâà13,5áâà14,5áâà15,5áâà16
7700000000024520006
5áâà17,6ª1,6ª2,6ª3,7,7áâà7,8ª1,8ª1áâà2
7700000000024520007
8ª2,9,10ª1,11,11áâà1,11ª2,12ª1,12ª2
7700000000024520008
12ª2áâà2,13,14,14áâà1,15,15áâà1,17
7700000000024520009
17áâà2,17ª2,19,19ª2,20,22ª1,22ª2,24,26
7700000000024520010
2,4,8,10,12,14,16,18,20,22,22,24,26
7700000000024530001
26áâà1,28,30,31
7700000000024530002
1,3,3áâà1,3áâà2,3áâà2,3áâà3,3áâà4,3áâà5
7700000000024540001
4áâà2,4áâà3,4áâà5,4,6áâà1,16áâà1
7700000000024540002
16áâà2,16áâà3
7700000000024540003
áâà6,áâà14,2ª1,2ª2,2,3,4,6,6,7
7700000000024550001
8ª1,8ª2,8ª3,8ª4,8,8,8,10ª1,10ª2,10
7700000000024550002
12ª1,12ª2,14,14,14,14áâà3,14áâà4
7700000000024550003
14áâà5,14áâà6,14áâà7,14áâà8
7700000000024550004
4/5áâà1,8,10áâà1,10áâà2,10áâà3,12,14
7700000000024560001
14áâà1,16,22áâà2,22/21áâà1,28
7700000000024560002
1áâà2,1áâà3,1áâà5,1áâà8,1áâà9,1áâà10
7700000000024580001
2/24áâà1,3,4áâà1,4áâà6,4
7700000000024580002
3,3ª2,4,4áâà2,5,6,6áâà2,7,7,8,9,9áâà2
7700000000024600001
9,10,10áâà2,12ª1,14ª2,16
7700000000024600002
2,2áâà2,2ª2,4,4áâà1,8ª2áâà2,10,11
7700000000024620001
áâà1,1ª2,1ª3,1/21,1/21áâà1,2,3/12,4
7700000000024630001
4ª1,4_,5,5,6,6_,7,7áâà1,10,12,13,14
7700000000024630002
7700000000024630003
14áâà6,16
7700000000024630004
1,1ª1,1,1áâà1,1,2,2áâà1,2ª1,2ª1áâà1
7700000000024640001
2ª1áâà2,2ª2,2ª3,2ª4,2ª4áâà1,2áâà1
7700000000024640002
2áâà3,2,2áâà1,6,6ª1,6ª2,8/29,9,12
7700000000024640003
14,15,17,20,23,23áâà1,23áâà2,23áâà3
7700000000024640004
7700000000024640005
23áâà9,23áâà10,23áâà11,23áâà12,23áâà13
7700000000024640006
23áâà14,23áâà15,23áâà16,23áâà17
7700000000024640007
23áâà18,23áâà19,23áâà20,23áâà21
7700000000024640008
7700000000024640009
23áâà26,23áâà27,23áâà28,23áâà29
7700000000024640010
23áâà30,23áâà31,23áâà32,23áâà33
7700000000024640011
23áâà34,23áâà35,25,25,25áâà1,25
7700000000024640012
1,2,2áâà1,2áâà2,3,5,6,6áâà1,7,8,9,11
7700000000024650001
13,14,15/20,16,22
7700000000024650002
18,18áâà2,18áâà5,18áâà6
7700000000024660001
1,2,3ª1,3ª2,4,4áâà1,5,6,6áâà1,7,8,9,10
7700000000024660003
11ª1,11ª2,12,13,13áâà1,14áâà1,14ª1
7700000000024660004
15ª1,15ª2,15ª3,15ª3áâà1
7700000000024660005
23,23áâà2,23áâà3,23áâà6,23áâà9,30
7700000000024700001
30áâà2,32,36
7700000000024700002
7,7áâà1,7áâà1,7áâà2,7áâà2,7áâà3
7700000000024700003
7áâà3,7áâà4,7áâà5,7áâà6,7áâà7,7áâà8
7700000000024700004
7áâà9,7áâà10,7áâà11,7áâà12,7áâà13
7700000000024700005
7700000000024700006
7700000000024700007
7700000000024700008
7áâà30,7áâà31,7áâà35,7áâà41,7áâà43
7700000000024700009
7áâà44,7áâà45,7áâà46,7áâà47,7áâà48
7700000000024700010
7áâà49,7áâà50,7áâà51,7áâà52,7áâà53
7700000000024700011
7áâà54,7áâà55,7áâà59,7áâà60,7áâà61,9
7700000000024700012
13,13áâà1,13áâà2,13áâà3,13áâà4
7700000000024700013
13áâà5,13áâà6,13áâà7,13áâà8
7700000000024700014
13áâà9,13áâà10,14ª1,14ª2,14ª2áâà2
7700000000024700015
15ª1,15ª2,16,17ª2,17ª2áâà1,17ª2áâà3
7700000000024700016
17ª2áâà4,17ª2áâà5,17ª2áâà6,17ª2áâà7
7700000000024700017
18ª1,18ª2,18,19,19áâà2,19áâà3,19áâà4
7700000000024700018
19áâà7,20ª1,20ª2,21áâà1,21áâà2,21áâà3
7700000000024700019
7700000000024700020
21áâà9,21áâà10,21áâà11,21áâà13,21
7700000000024700021
21áâà2,21áâà3,21áâà4,21áâà5
7700000000024700022
21áâà6,21áâà7,21áâà8,21áâà9,22
7700000000024700023
22áâà2,22áâà4,22ª2,22ª3,24ª1,24ª2,25
7700000000024700024
25áâà2,25áâà3,25áâà4,26ª1,26ª2,28ª1
7700000000024700025
28ª1áâà2,28ª1áâà3,28ª1áâà4,29áâà3
7700000000024700026
29áâà4,29áâà5,29áâà6
7700000000024700027
7700000000024710001
1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà13,3,3ª1
7700000000024720001
5áâà1,5,5áâà5,7,7áâà1,9áâà4,9áâà5
7700000000024720002
9áâà6,9áâà1,9áâà2,9áâà3,9áâà4
7700000000024720003
5,5áâà1,5áâà2,5áâà3,5áâà4,5áâà6
7700000000024720004
7áâà1,7áâà2,7áâà3,7áâà4,7áâà2
7700000000024720005
7700000000024720006
2áâà1,2áâà2,2áâà3,2áâà5,2áâà6,2áâà7
7700000000024730001
2áâà8,2áâà9,2áâà9,2áâà10,2áâà12
7700000000024730002
2áâà13,2áâà20,2áâà26,2ª1,2ª2,2ª3,2ª4
7700000000024730003
2ª4áâà1,2ª7,2áâà1,2áâà2,2áâà3
7700000000024730004
2áâà4,2áâà5,2áâà6,2áâà7,2,2áâà1
7700000000024730005
2,2áâà1,2,2áâà1,2áâà2,3,4áâà3
7700000000024730006
4áâà4,6áâà1,6áâà2,6áâà3,6áâà4,6áâà6
7700000000024730007
6áâà7,6áâà8,6áâà11,8áâà1,8áâà2,8áâà3
7700000000024730008
8áâà4,8áâà7,8áâà8,8áâà9,8áâà20,8áâà26
7700000000024730009
áâà4,1/5,2áâà1,2áâà2,2áâà3,2áâà4,2,3
7700000000024740001
4,4áâà1,4áâà2,4áâà3,4,5,5áâà2,6
7700000000024740002
6ª1,6,6áâà1,6áâà2,7,8,9,11,12áâà1
7700000000024740003
12áâà2,12áâà3,12áâà4,13,14,15ª1,16,17
7700000000024740004
17áâà2,18áâà1,18áâà2,18áâà3,18áâà4,22
7700000000024740005
1,1,2,2áâà2,2,3áâà1,3áâà2,3áâà3
7700000000024750001
3áâà4,4,4áâà1,5áâà1,5áâà2,6,6áâà2,7,8
7700000000024750002
10,10áâà2,12,12áâà2,14,15,15,15áâà1
7700000000024750003
15áâà2,15áâà3,16,18,19,20,20áâà2,22
7700000000024750004
3áâà1,3áâà2,3áâà3,4,5,5áâà2,5,6ª1,6ª2
7700000000024770001
6ª3,7
7700000000024770002
1ª1áâà2
7700000000024780001
1,1áâà1,1áâà2,1áâà17,2,2áâà1,2áâà2,2ª1
7700000000024780002
3,4,5,5áâà1,5,5áâà1,5áâà2,5áâà3
7700000000024780003
5áâà4,5áâà5,5áâà6,5áâà7,5áâà8
7700000000024780004
5áâà9,5áâà10,5áâà11,5áâà12,5áâà13
7700000000024780005
5áâà14,5áâà15,5áâà16,5áâà17
7700000000024780006
5áâà18,5áâà19,5áâà20,5áâà22
7700000000024780007
5áâà23,5áâà25,5áâà26,5áâà27
7700000000024780008
5áâà28,5áâà29,5áâà32,5áâà33
7700000000024780009
7700000000024780010
7700000000024780011
5áâà42,5áâà44,5áâà45,5áâà46,6
7700000000024780012
6áâà2,7,7ª2,7ª2áâà1,8,9,9ª2,10,11
7700000000024780013
11áâà1,12,12ª1,12ª2,12ª2áâà1,12ª2áâà2
7700000000024780014
13,14,14ª1,14ª1áâà1,14ª1áâà2,15ª1,15ª2
7700000000024780015
15ª3,16,16ª1,17,18,18ª1,19,20,20ª1
7700000000024780016
20ª1áâà1,22,22áâà2,22ª2,24,24áâà1
7700000000024780017
24ª3áâà1,24ª3áâà2,24ª3áâà3,24ª3áâà4
7700000000024780018
24ª3áâà5,24ª3áâà6,24ª3áâà7,24ª3áâà8
7700000000024780019
24ª3áâà9,24ª3áâà10,24ª3áâà11,24ª3áâà12
7700000000024780020
24ª3áâà13,24ª3áâà14,24ª3áâà15
7700000000024780021
24ª3áâà16,24ª3áâà17,24ª3áâà18
7700000000024780022
24ª3áâà19,24ª3áâà20,24ª3áâà21
7700000000024780023
24ª3áâà22,24ª3áâà23,24ª3áâà24
7700000000024780024
24ª3áâà25,24ª3áâà26,24ª3áâà27
7700000000024780025
24ª3áâà28,24ª3áâà29,24ª3áâà30
7700000000024780026
24ª3áâà31,24ª3áâà32,24ª3áâà33
7700000000024780027
24ª3áâà34,24ª3áâà35,24ª3áâà36
7700000000024780028
24ª3áâà37,24ª3áâà38,24ª3áâà39
7700000000024780029
24ª3áâà40,24ª3áâà41,24ª3áâà42
7700000000024780030
24ª3áâà43,24ª3áâà44,24ª3áâà45
7700000000024780031
24ª3áâà46,24ª3áâà47,24ª3áâà48
7700000000024780032
24ª3áâà49,24ª3áâà50,24ª3áâà51
7700000000024780033
24ª3áâà52,24ª3áâà53,24ª3áâà54
7700000000024780034
24ª3áâà55,24ª3áâà56,24ª3áâà57
7700000000024780035
24ª3áâà58,24ª3áâà59
7700000000024780036
5ª1,5ª2,7,9áâà1,10áâà2,10ª1,10ª2,10ª3
7700000000024800001
12,15,17áâà1
7700000000024800002
11,13áâà1,13áâà2,20/21
7700000000024810001
12,12áâà2,12áâà3,12áâà4,15,17
7700000000024820001
2/50,3,4,4áâà3,4,5áâà1,5áâà3,5áâà4
7700000000024820002
5áâà5,5áâà7,5áâà8,5áâà9,5áâà13,6,6áâà2
7700000000024820003
6áâà3,6ª2,6ª2áâà4,7,7áâà2,7áâà3,7áâà5
7700000000024820004
8,8áâà2,9/2áâà1,9/2áâà2,9/2áâà3
7700000000024820005
9/2áâà4,9/2áâà5,9/2áâà6,9/2áâà7,11áâà1
7700000000024820006
11áâà2,11áâà3,11áâà4,11,11áâà2,13ª1
7700000000024820007
13ª2,13ª3,13ª8,19
7700000000024820008
26,26áâà1,26áâà2,26áâà3,26áâà4,26áâà5
7700000000024830001
119297
26áâà6,26áâà7,26áâà8,26áâà9
7700000000024830002
2áâà1,2áâà2,2áâà3,2ª1,2,4,4ª1,4ª2,4ª3
7700000000024830003
4ª4,4ª5,4ª5áâà1,4ª6,5áâà1,5áâà2,5áâà3
7700000000024830004
7700000000024830005
5áâà10,5áâà11,5áâà12,5áâà13,5áâà14,6,7
7700000000024830006
7áâà1,7áâà2,7áâà3,7áâà4,7áâà6,7áâà8
7700000000024830007
7áâà9,7áâà11,7áâà12,7áâà13,7áâà14
7700000000024830008
7áâà15,7áâà16,7áâà18,7áâà20,7áâà21
7700000000024830009
7áâà22,7áâà24,7áâà25,7áâà26,7áâà27
7700000000024830010
7áâà28,7áâà31,7áâà32,7áâà33,7áâà34
7700000000024830011
7áâà35,7áâà36,7áâà37,7áâà38,7áâà39
7700000000024830012
7áâà42,7áâà48,7áâà55,7áâà56,7áâà57
7700000000024830013
7áâà58,7áâà59,7áâà61,7áâà61,7áâà62
7700000000024830014
7áâà63,7áâà64,7áâà65,7áâà66,7áâà67
7700000000024830015
7áâà68,7áâà69,7áâà70,7áâà71,7áâà72
7700000000024830016
7áâà74,7áâà75,7áâà76,7áâà77,7áâà78
7700000000024830017
7áâà79,7áâà80,7áâà81,7áâà82,7áâà83
7700000000024830018
7áâà84,7áâà85,7áâà86,7áâà87,7áâà88
7700000000024830019
7áâà89,7áâà90,7áâà91,7áâà92,7áâà93
7700000000024830020
7áâà94,7áâà95,7áâà96,7áâà97,7áâà98
7700000000024830021
7áâà99,7áâà100,7áâà101,7áâà102,7áâà103
7700000000024830022
7áâà104,7áâà105,7áâà106,7áâà107
7700000000024830023
7áâà108,7áâà109,7áâà110,7áâà111
7700000000024830024
7áâà112,7áâà113,7áâà114,7áâà115
7700000000024830025
7áâà116,7áâà117,7áâà118,7áâà119
7700000000024830026
7áâà120,7áâà121,7áâà122,7áâà123
7700000000024830027
7áâà124,7áâà125,7áâà126,7áâà127
7700000000024830028
7áâà128,7áâà129,7áâà130,7áâà131
7700000000024830029
7áâà132,7áâà133,7áâà134,7áâà135
7700000000024830030
7áâà136,7áâà137,7áâà138,7áâà139
7700000000024830031
7áâà140,7áâà141,7áâà142,7áâà143
7700000000024830032
7áâà144,7áâà145,8,10,10ª1,12,12áâà1
7700000000024830033
12ª1,12ª1áâà1,12ª2,12,14,16,16áâà1
7700000000024830034
16ª1,16ª2,16ª3,16ª4,18,18ª1,20,20ª1,22
7700000000024830035
10/7áâà1,10/7áâà2,12/8áâà1,12/8áâà2
7700000000024850001
7700000000024850002
16áâà4,16áâà5,18áâà2,18áâà3,20áâà1
7700000000024850003
20áâà2,22/23áâà1
7700000000024850004
1,3áâà1,5áâà3,5/7áâà1,9áâà1,9áâà3,11
7700000000024850005
11/10áâà1,13áâà1,13áâà2,15,17,19
7700000000024850006
21áâà1,21áâà2,21áâà4,21áâà7,23,25,25áâà1
7700000000024850007
4,4áâà2,4áâà3,6,6áâà2,6áâà3,6áâà4
7700000000024860001
6áâà5,6áâà6,6áâà7,6áâà8,8áâà1,10áâà1
7700000000024860002
7700000000024860003
10,12,14,16,16áâà1,18,20/18áâà1,21/21
7700000000024870001
22/23,24,24áâà1,26,26áâà2,28/14
7700000000024870002
23,23áâà1,23áâà2,25,27/20,29/13,30,31
7700000000024870003
31áâà2,31áâà3,31áâà4,31áâà12,32,32áâà2
7700000000024870004
33/12,34,34áâà4,35áâà1,35áâà2,36/1,37
7700000000024870005
37áâà2,37áâà3,38,39ª1,39ª1áâà1,39/22
7700000000024870006
40,42,42áâà1
7700000000024870007
1ª1,2/3,3,4,5,5áâà2,5áâà3,6,7ª1,7ª2
7700000000024870008
7ª3,7ª4,8ª1,8ª2,8ª3,8ª4,9,11,13,15áâà1
7700000000024870009
15áâà2,15áâà3,15áâà4,15áâà5,17,19/16
7700000000024870010
1/12,1/12áâà2,1,2/10,2/10áâà2,2,3ª2
7700000000024880001
3ª2áâà2,4ª2,4ª2áâà2,4ª2áâà3,4ª3,4ª4,5
7700000000024880002
6,7ª2,7ª2áâà1,7ª2áâà2,8áâà1,8ª2
7700000000024880003
8ª2áâà1,8ª2áâà3,8ª3,8ª4,8ª5,8ª5áâà1
7700000000024880004
2áâà1,4áâà1
7700000000024900001
3áâà1,3áâà2,4,5áâà1,5/22áâà1,5/22áâà2
7700000000024910001
6/25,6/25áâà2,7,8áâà1,8áâà2,10,11ª
7700000000024910002
11ª,11áâà1,11áâà2,11áâà4,11áâà5
7700000000024910003
11áâà6,11áâà8,11áâà9,11áâà20,12áâà1
7700000000024910004
12áâà2,12áâà3,15/13áâà1,15/13áâà2
7700000000024910005
7700000000024910006
1ª1,1ª1áâà2,2áâà1,2ª1,2ª2,2ª2áâà2
7700000000024920001
2ª2áâà3,2ª4,2ª5,2ª5áâà2,2ª6,2,3ª1
7700000000024920002
3ª1áâà2,3ª1áâà3,3ª1,3ª1áâà1,3ª1áâà2
7700000000024920003
3ª1áâà3,3ª2,3ª2,3,3áâà2,3,4ª1
7700000000024920004
4ª1áâà2,4ª2,4ª3,4ª3áâà2,4ª4,4ª5,5ª1
7700000000024920005
5ª2,5ª3,6,6áâà2,6áâà3,6ª2áâà2,6ª3,6
7700000000024920006
7ª1,7ª1áâà2,7ª1,7ª1,8áâà1,8,9ª1
7700000000024920007
9ª1áâà2,9ª1áâà3,9ª1,9ª2,9ª3,10,10áâà3
7700000000024920008
10áâà4,11ª1,11ª2,11ª3,13áâà1,13ª1,13ª2
7700000000024920009
13ª3,13ª3áâà2,13ª3áâà3,13
7700000000024920010
2ª1,2ª2,2ª3,2,3,3,3,3,4ª1,4ª1áâà4
7700000000024930001
4ª1áâà5,4ª2,4ª3,4ª3áâà7,4ª4,4ª4áâà2,4
7700000000024930002
5ª1,5ª1áâà4,5,5,6,6,6,8,8ª1
7700000000024930003
8ª1áâà2,8ª2
7700000000024930004
1,3,3áâà2,5
7700000000024940001
1áâà1,1áâà2,2áâà1,2áâà2,6
7700000000024950001
4,6,6áâà1
7700000000024960001
2/14,11,12,12áâà1,12áâà2,15,17,18,21,23
7700000000024970001
1,1áâà1,2áâà1,2áâà7,2áâà10,3,5ª1,5ª2
7700000000024980001
5ª2áâà1,6,7,7áâà2,8,9,9áâà2,10
7700000000024980002
2áâà1,3áâà1,3áâà2,3áâà3,3áâà5,3áâà6
7700000000025000001
3áâà8,3áâà10,3áâà11,3áâà14,3áâà19
7700000000025000002
3áâà60,3áâà61,3áâà62,6áâà13,11áâà1
7700000000025000003
13áâà1,13áâà2,13áâà4,13áâà5
7700000000025000004
13áâà7,13áâà8,13áâà9,13áâà10
7700000000025000005
15áâà3,15áâà10,15áâà13,15áâà1
7700000000025000006
1,2,3,3áâà2,4,4áâà2,4áâà3,4áâà5,4áâà6
7700000000025010001
4áâà7,4áâà8,4áâà11,4áâà12,4áâà16
7700000000025010002
4áâà17,4áâà26,4ª3,5,6,6áâà1,6ª1,6/16ª1
7700000000025010003
6,6áâà1,6áâà2,6áâà3,6áâà4,7
7700000000025010004
8áâà3,9,10ª1,10ª2,10ª2áâà1,10ª3,10ª4
7700000000025010005
10ª5,10ª5áâà1,10ª5áâà2,10,11,11áâà2
7700000000025010006
12áâà1,14áâà1,14/20ª1,14/20ª2
7700000000025020001
14_20áâà7,14,14áâà2,15áâà1,15áâà5
7700000000025020002
15áâà6,15áâà7,15áâà8,15áâà10,15áâà13
7700000000025020003
15áâà14,15áâà15,15áâà16,15áâà16
7700000000025020004
7700000000025020005
7700000000025020006
15áâà30,15áâà31,15áâà32,15áâà33
7700000000025020007
15áâà35,15áâà37,15áâà41,15áâà42
7700000000025020008
15áâà43,15áâà44,15áâà47,15áâà48
7700000000025020009
15áâà49,15áâà50,15áâà51,15áâà51
7700000000025020010
15áâà56,22,22áâà3,24ª1,24áâà1,24áâà2
7700000000025020011
11/5,11/5áâà2
7700000000025020012
1,1áâà2,1,3,4,4áâà1,4áâà2,4,4áâà1
7700000000025030001
2,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,3áâà6
7700000000025040001
3áâà8,3áâà9,3áâà12,3áâà16,3,5,5áâà2,6
7700000000025040002
9,9áâà2,9áâà3,9ª1,11áâà1,11áâà2
7700000000025050001
11áâà5,11áâà6,11áâà8
7700000000025050002
2áâà2,4ª1,4ª2,8
7700000000025050003
áâà4,áâà21,5,5áâà2,5áâà3,5áâà4,5áâà5
7700000000025060001
5áâà6,5áâà7,7,7áâà2,7áâà3,8,8áâà1
7700000000025060002
8áâà2,8áâà3,8áâà4,8áâà5,8áâà6,8áâà7,10
7700000000025060003
10áâà1,12,12áâà4,12áâà21,12áâà22,12ª1
7700000000025060004
12ª1áâà2,12ª1áâà3,12ª1áâà4,12ª1áâà5,12ª2
7700000000025060005
5,7/16,7/16áâà2,7/16áâà3,7/17,8ª2
7700000000025070001
8ª2áâà2,9,11,14,15,15áâà3,16,18áâà1
7700000000025070002
18áâà2,18áâà4,18áâà5,18áâà6,18áâà7
7700000000025070003
18áâà8,18áâà9,18áâà10,18áâà16,19
7700000000025070004
7700000000025070005
20áâà8,20áâà9,20áâà11,20áâà12,24
7700000000025070006
24áâà2,24áâà3,24áâà4,24áâà5,24
7700000000025070007
24áâà2,26áâà1,26áâà2,26áâà3,26áâà4
7700000000025070008
26áâà5,26áâà6,26áâà24,30áâà11
7700000000025070009
21áâà1,21áâà2,30áâà1,30áâà2,30áâà3
7700000000025070010
7700000000025070011
30áâà9,30áâà10,30áâà12
7700000000025070012
4,4áâà4,4,7/8,7/8áâà2,7/8áâà3
7700000000025080001
1,1áâà4,1áâà5
7700000000025090001
áâà1,áâà2,áâà3,áâà5,áâà6,áâà7,áâà8
7700000000025120001
áâà9,áâà10,áâà11,áâà12,áâà13,áâà15
7700000000025120002
áâà16,áâà17,áâà18,áâà19,áâà20,ª1
7700000000025120003
1áâà1,1áâà1
7700000000025120004
1,3,3áâà2,5,5áâà2,7,9,11,11ª2,11ª2áâà2
7700000000025120005
13áâà2,15,17,17áâà2
7700000000025120007
7700000000025120006
79,79áâà1,79ª2,79ª2áâà2,79ª3,81ª1,81ª2
7700000000025120008
81ª3,83ª1,83ª1áâà5,83ª4,83ª5,85ª3,87ª2
7700000000025120011
89ª1,89ª2,89ª3,91áâà6,91ª1,91ª1áâà1
7700000000025120012
91ª1áâà2,91ª2,91ª3,91ª3áâà5,91ª4,91
7700000000025120013
91áâà1,93ª1,93ª2,93ª3
7700000000025120014
60ª39,60ª40,60ª41,62,62áâà1,66,66áâà2
7700000000025120015
56áâà1,58,58áâà4,58áâà5,58áâà6,58áâà7
7700000000025120016
58áâà8,58áâà10,58áâà11,58áâà12,58áâà13
7700000000025120017
58áâà14,58áâà15,58áâà16,58áâà17
7700000000025120009
58áâà18,58áâà19,58áâà20,58áâà22
7700000000025120010
58áâà25,58áâà43,60áâà1,60ª1,60ª2,60ª3
7700000000025120018
60ª4,60ª5,60ª6,60ª7,60ª8,60ª9,60ª10
7700000000025120019
60ª11,60ª12,60ª13,60ª14,60ª15,60ª16
7700000000025120020
60ª17,60ª18,60ª19,60ª20,60ª21,60ª22
7700000000025120021
60ª23,60ª24,60ª25,60ª26,60ª27,60ª28
7700000000025120022
60ª29,60ª30,60ª31,60ª32,60ª33,60ª34
7700000000025120023
60ª35,60ª35áâà2,60ª36,60ª37,60ª38
7700000000025120024
66áâà3,66áâà4,66áâà5,66áâà9,66áâà10
7700000000025120025
143áâà24,149_áâà1,149_áâà2,151ª1
7700000000025120026
68áâà3,68áâà4,68áâà5,68áâà6,68áâà7
7700000000025120028
143,143áâà2,143áâà4,143áâà8,143áâà10
7700000000025120029
143áâà11,143áâà12,143áâà14,143áâà23
7700000000025120030
151ª1áâà1,151ª1áâà2,151ª1áâà3
7700000000025120031
151ª1áâà4,151ª1áâà5,151ª1áâà6
7700000000025120032
151ª1áâà7,151ª1áâà8,151ª1áâà9,151ª2
7700000000025120033
151ª2áâà4,151ª3,151ª3áâà1,151ª3áâà2
7700000000025120034
151ª3áâà3,151ª3áâà4,151ª3áâà5
7700000000025120035
151ª3áâà6,151ª3áâà7,151ª3áâà8
7700000000025120036
151ª3áâà9,151ª3áâà10,151ª3áâà11
7700000000025120037
151ª3áâà12,151ª3áâà14,151ª3áâà15
7700000000025120038
151ª3áâà17,151ª3áâà18,151ª3áâà19
7700000000025120039
151ª3áâà20,151ª3áâà21,151ª3áâà22,151ª4
7700000000025120040
151ª5,151ª6
7700000000025120041
95áâà3,95ª1,95ª2,97ª1,97ª2,97ª3,99ª1
7700000000025120042
99ª2,99ª3,99ª4,99ª5,101ª1,101ª2,101ª3
7700000000025120043
103,105,105áâà1,107áâà1,109,109áâà1
7700000000025120044
109ª1,109ª1áâà1,109ª2,109ª3,109ª4
7700000000025120045
109ª5,109ª6,109ª6,111,115,121,121áâà2
7700000000025120046
121áâà3,121áâà4,135áâà1,135áâà2
7700000000025120047
28,28áâà3,28ª1,28ª1,28ª2,28ª3,30ª1
7700000000025120048
30ª2,30ª2áâà2,32,34ª1,34ª2,34ª3áâà2
7700000000025120049
34ª3,36ª1,36ª2,38ª1,38ª2,38ª2áâà2
7700000000025120050
40ª1,40ª2,40ª3,40ª3áâà2,40ª4,42ª1
7700000000025120051
42ª1áâà1,42ª2,44áâà3,44ª1,44ª2,48/1,50
7700000000025120052
50áâà3,52,52_,64ª2,68,68áâà1,68áâà2
7700000000025120053
68áâà9,68áâà10,68áâà14,68áâà19,68
7700000000025120054
68áâà1,68áâà2,68áâà3,68áâà4
7700000000025120055
68áâà5,68áâà6,68áâà7,68áâà8
7700000000025120056
68áâà9,68áâà10,68áâà11,68áâà12
7700000000025120057
68áâà13,68,68áâà1,68áâà2,68áâà3
7700000000025120058
12,12ª1,12ª1áâà2,12ª2,14ª1,14ª1áâà2
7700000000025120060
14ª2,14ª3,16áâà1,16áâà2,16ª1,16ª1áâà1
7700000000025120061
16ª2,16ª3,16ª4,18ª1,18ª1áâà2,18ª2,18ª3
7700000000025120062
20áâà4,20ª1,20ª2,20ª3,22ª1,22ª1áâà2
7700000000025120063
24ª1,24ª2,24ª3,24ª4,24ª5,26áâà7,26áâà8
7700000000025120064
26ª1,26ª1,26ª2,26ª3,26ª3áâà2,26ª3áâà5
7700000000025120065
26ª4,26ª6,26ª6áâà2,26ª6áâà3,26ª6áâà4
7700000000025120066
26ª6áâà5,26ª6áâà17,26ª6áâà18,26ª6áâà19
7700000000025120067
26ª6áâà20
7700000000025120068
10,10áâà1
7700000000025120069
4,4áâà1
7700000000025120070
3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,3áâà6,4
7700000000025130001
10/14,13,16áâà1
7700000000025130002
2ª1,2ª2,2ª3,2ª4,2ª5,2ª6,2ª7,2ª8,2ª9
7700000000025140001
2/18,2/18áâà2,2áâà1,3,3áâà1,3áâà2
7700000000025140002
3áâà3,3áâà4,3áâà8,3áâà9,3áâà10,3áâà11
7700000000025140003
3áâà12,3áâà13,3áâà16,3áâà17,4áâà4
7700000000025140004
4áâà5,4ª1,4ª2,4ª3,6
7700000000025140005
1/3áâà13,1/3áâà16,1/3áâà18,1/3áâà23
7700000000025150001
1/3áâà24,1/3áâà25,1/3áâà27,1/3áâà32
7700000000025150002
1/3ª1,1/3ª2,1/3ª2,1/3ª3,1/3ª4,1/3ª5
7700000000025150003
1/3ª6,1/3ª7,1/3ª8,1/3ª9,1/3ª10,1/3ª11
7700000000025150004
1/3ª12,1/3ª13,1/3ª15,1/3ª17,1/3ª20,2,6
7700000000025150005
1áâà1,3,6,6áâà1,8,9,10,11,11áâà1
7700000000025160001
1,2ª,3,4áâà1,4áâà3,4áâà4,4áâà5,6áâà1
7700000000025170001
6áâà2,8
7700000000025170002
5áâà1,5áâà2,6áâà1,6áâà2,6áâà3,7áâà1
7700000000025180001
7áâà10,8áâà1,8áâà2,10áâà1,10áâà2
7700000000025180002
7700000000025190001
7700000000025190002
1áâà13,1áâà14,1áâà15,1áâà16,1áâà1,3
7700000000025190003
7700000000025190004
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà9
7700000000025210001
2áâà10,2áâà26,2áâà29,2áâà30,2,3áâà1,5
7700000000025210002
5áâà1,8,9ª2,11ª1,11ª2,13ª1,13ª2
7700000000025210003
13ª2áâà1,15,15áâà1,17,17áâà1,19ª1,19ª2
7700000000025210004
21ª1,21ª2,21ª2áâà1,23,23ª1,25,27ª1
7700000000025210005
27ª2,27ª2áâà2,29ª1,29ª2,29ª2áâà1
7700000000025210006
31áâà2,31ª1,31ª2,33ª1,33ª2,35,37,41áâà1
7700000000025210007
1/2,2,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6
7700000000025220001
2áâà7,2áâà8,2áâà9,2áâà10,2áâà1,2áâà2
7700000000025220002
3,3ª2,3ª3,3ª5,3ª6,3ª7,4ª1,4ª2,4ª2áâà1
7700000000025220003
4ª2áâà2,6,6ª5,6ª6,6,6ª1,6ª2,6ª3,6
7700000000025220004
7áâà1,7áâà2,7áâà3,8ª1,8ª2,8,8áâà2
7700000000025220005
8ª1,8,9,9áâà1,9ª1,9ª2,10ª1,10ª2
7700000000025220006
10ª3,10ª4,10ª4áâà2,12/7ª,12/7ª
7700000000025220007
12/7áâà3,12áâà1,12áâà2,13/12ª1
7700000000025220008
13/12ª2,14áâà1,14áâà2,14áâà3,14áâà4
7700000000025220009
7700000000025220010
14áâà10,14áâà11,14áâà12,14áâà13
7700000000025220011
14áâà14,14áâà15,14áâà16,14áâà17
7700000000025220012
14áâà18,14áâà19,14áâà20,14áâà21
7700000000025220013
14áâà22,14áâà23,14áâà24,14áâà25
7700000000025220014
14áâà26,14áâà27,14áâà29,14áâà30
7700000000025220015
14áâà31,14áâà32,14áâà33,15,15áâà1
7700000000025220016
15áâà1,15,17,17,19
7700000000025220017
1,2,2áâà1,2áâà8,2áâà19,2áâà25,2áâà26
7700000000025230001
2áâà29,2áâà31,2áâà37,2áâà41,2ª1,3,4
7700000000025230002
4ª,4áâà2,4ª1,4ª1áâà1,4ª1áâà2,4ª1áâà3
7700000000025230007
4ª1áâà4,4ª1áâà5,4ª1áâà6,4_,5,7,8
7700000000025230008
8ª2áâà1,8ª2áâà2,8ª2áâà3,9,10,11,12ª1
7700000000025230009
12ª2,12ª3,13,14,14áâà3,14ª2,14ª3
7700000000025230010
14ª3áâà1,14ª4,16ª1,16ª2,16ª3,16ª4,16ª5
7700000000025230011
18áâà4,18ª1,18ª1áâà6,18ª2,18ª3,20
7700000000025230012
1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà1,2
7700000000025240001
3áâà1,3áâà2,3
7700000000025240002
1,5,8áâà1,12,12áâà1,12áâà2,12,12áâà7
7700000000025250001
13,13áâà6,14áâà1,15áâà1,21áâà1,21áâà1
7700000000025250002
1,1áâà1,12,17,17áâà1,18áâà1,18áâà2
7700000000025260001
18áâà3,18áâà4,18áâà5,19,19áâà2,21áâà1
7700000000025260002
21ª1,21ª2,21ª2áâà3,21ª3,22áâà1,22áâà2
7700000000025260003
22áâà3,22áâà4,22áâà5,22áâà6,22áâà10,26
7700000000025260004
26áâà1,26áâà2,28,28,30,30áâà2
7700000000025260005
18,20áâà1,20áâà2,20
7700000000025310001
7700000000025310002
19áâà2,19áâà3,19áâà4,22áâà1,22áâà2
7700000000025310003
22áâà3,22áâà4,22áâà5,22áâà6
7700000000025310004
22áâà7,22áâà8,22áâà9,24áâà1,24áâà2
7700000000025310005
24áâà3,24áâà4,24áâà5,24áâà6,24áâà7,24
7700000000025310006
24áâà2,24áâà6,26,26áâà1,26áâà2
7700000000025310007
7700000000025310008
26áâà8,26áâà9,26áâà10,26,28áâà
7700000000025310009
7700000000025310010
28áâà6,28áâà8,28áâà9,28áâà1,28áâà2
7700000000025310011
28áâà3,28áâà4,28áâà5,28áâà7
7700000000025310012
28áâà8,28áâà9,28áâà10,28áâà11
7700000000025310013
28áâà12,28áâà13,28,30áâà1,30áâà2
7700000000025310014
30áâà3,32,34áâà,34áâà1,34áâà2,34áâà4
7700000000025310015
34áâà5,34,34áâà1,34áâà2,34áâà3,34
7700000000025310016
36áâà1,36áâà2,36ª1,36ª1áâà1,36ª1áâà2
7700000000025310017
36ª2,36ª3,36ª3áâà1,36ª4,36ª5,36
7700000000025310018
37áâà6,37áâà7,37áâà8,38,38áâà1,38áâà2
7700000000025310019
38áâà3,38áâà4,38áâà5,38áâà6,38áâà6
7700000000025310020
38áâà7,38áâà11,38áâà12,38áâà13,38áâà14
7700000000025310021
38áâà15,38áâà17,38áâà18,38áâà19
7700000000025310022
38áâà20,38áâà21,38_áâà1,38_áâà2
7700000000025310023
38_áâà3,38_áâà4,38_áâà5,38_áâà6
7700000000025310024
38_áâà7,38_áâà8,38áâà1,38áâà2
7700000000025310025
38áâà3,38áâà4,38áâà5,38áâà6
7700000000025310026
38áâà7,38áâà19,38,39áâà1,39áâà2
7700000000025310027
7700000000025310028
39ª1,40áâà1,40áâà2,40áâà3,40áâà4
7700000000025310029
40áâà5,40áâà6,40áâà7,40áâà8,40
7700000000025310030
7700000000025310031
40áâà5,40áâà6,40áâà8,40áâà9,41áâà1
7700000000025310032
7700000000025310033
41ª1áâà1,41ª1áâà2,41ª1áâà3,41ª1áâà4
7700000000025310034
41ª1áâà5,41ª1áâà6,42áâà1,42áâà2,42áâà3
7700000000025310035
42áâà4,42áâà5,42áâà6,42áâà1,42áâà2
7700000000025310036
42áâà3,42áâà4,42áâà5,42áâà6
7700000000025310037
42áâà7,42áâà8,42áâà9,42áâà10
7700000000025310038
42áâà11,42áâà12,42áâà13,43áâà1
7700000000025310039
7700000000025310040
43áâà7,43áâà8,43áâà10,43ª1,43ª1áâà2
7700000000025310041
43ª1áâà3,43ª1áâà4,43ª2,43,43áâà1
7700000000025310042
43áâà2,43áâà5,43áâà6,43áâà7
7700000000025310043
43áâà8,43áâà9,43,43ª1,43ª2,44
7700000000025310044
44áâà2,44áâà4,44áâà5,44áâà6,44áâà7
7700000000025310045
44áâà8,44áâà9,44áâà10,44áâà11,44áâà12
7700000000025310046
44áâà14,44áâà15,44áâà16,44áâà17
7700000000025310047
44áâà18,44áâà19,44áâà20,44áâà21
7700000000025310048
44áâà22,44áâà23,44áâà24,44áâà25
7700000000025310049
44áâà26,44áâà27,44áâà28,44áâà29
7700000000025310050
44áâà30,44áâà31,44áâà32,44áâà33
7700000000025310051
44áâà34,44áâà35,44áâà36,44áâà37
7700000000025310052
44áâà38,44áâà39,44áâà40,44áâà41
7700000000025310053
44áâà42,44áâà43,44áâà44,44áâà45
7700000000025310054
44áâà46,44áâà47,45,45áâà2,45áâà3
7700000000025310055
45áâà4,45áâà5,45áâà11,45áâà12,45áâà13
7700000000025310056
7700000000025310057
7700000000025310058
45áâà22,45áâà23,45ª2,45ª2áâà1,45ª3,45
7700000000025310059
45áâà1,45áâà2,45áâà6,45áâà10
7700000000025310060
45áâà11,45áâà13,45áâà14,45áâà15
7700000000025310061
45áâà17,45áâà19,45áâà22,45áâà24
7700000000025310062
45áâà25,45áâà26,45,45,46áâà1
7700000000025310063
46áâà2,46áâà3,46áâà4,46áâà5,46áâà6
7700000000025310064
7700000000025310065
46áâà12,46áâà13,46áâà14,46áâà15
7700000000025310066
46áâà16,46áâà17,46áâà18,46áâà19,46_
7700000000025310067
47áâà1,47áâà2,47áâà3,47áâà5,47áâà6
7700000000025310068
47áâà13,47áâà14,47áâà15,47ª2,47ª3áâà1
7700000000025310069
47ª3áâà2,47ª3áâà3,47ª3áâà4,47ª3áâà5
7700000000025310070
47ª3áâà6,47ª3áâà7,47ª3áâà8,47áâà16
7700000000025310071
47áâà18,47áâà20,47áâà21,47áâà23
7700000000025310072
47áâà27,47,47áâà1,51áâà1,51áâà2
7700000000025310073
7700000000025310074
7700000000025310075
51áâà13,51,51áâà1,51áâà2,51áâà3
7700000000025310076
51áâà4,51áâà5,51áâà6,51áâà7
7700000000025310077
51áâà8,51áâà9,51áâà10,53,53áâà2
7700000000025310078
7700000000025310079
53áâà8,53áâà9,53áâà10,53áâà11,53áâà1
7700000000025310080
53áâà2,53áâà3,53áâà4,53áâà5
7700000000025310081
12,13,13áâà1,14,14áâà1,16,16áâà3,20
7700000000025310082
37áâà5
7700000000025310083
53áâà6,53áâà7,53áâà8,54,55áâà1
7700000000025310084
7700000000025310085
55áâà7,55áâà8,55áâà9,55áâà10,55áâà12
7700000000025310086
55áâà13,55áâà14,55áâà15,55áâà16
7700000000025310087
55áâà17,55áâà18,55áâà19,55áâà20
7700000000025310088
55áâà21,55áâà22,55áâà23,55áâà24
7700000000025310089
55áâà25,55áâà26,55áâà27,55áâà28
7700000000025310090
55áâà29,55áâà30,55áâà31,55áâà32
7700000000025310091
55áâà33,55áâà34,55,56,57áâà1,59
7700000000025310092
59áâà,61áâà1,61áâà3,61áâà4,61áâà5
7700000000025310093
63áâà1,63áâà2,63áâà3,63áâà4,63áâà5
7700000000025310094
63áâà1,63áâà2,63áâà3,63áâà4
7700000000025310095
63áâà5,63áâà6,63áâà7,63áâà8
7700000000025310096
63áâà9,63áâà10,63áâà11,63áâà12
7700000000025310097
63áâà19,63,63áâà1,63,65áâà1,65áâà2
7700000000025310098
65áâà3,65áâà4,65áâà5,65áâà6,67áâà1
7700000000025310099
69áâà1,69áâà2,69áâà3,69áâà4,69áâà5,73
7700000000025310100
4,6,8ª1,8ª1áâà3,8ª2,8,9,9áâà2,11áâà1
7700000000025310102
48áâà1,48áâà2,48áâà11
7700000000025310103
121530
1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,17
7700000000025310104
7700000000025310105
17áâà6,17áâà7,17áâà8,17áâà9,17áâà10
7700000000025310106
17áâà11,17áâà12,17áâà13,17áâà14,17
7700000000025310107
17áâà1,17áâà2,17áâà3,19,19áâà1,21
7700000000025310108
21áâà1,37áâà1,37áâà2,37áâà3,37áâà4
7700000000025310109
2áâà1
7700000000025340001
3,5,7áâà1,7áâà2,7áâà3,7áâà4,7,9
7700000000025350001
11,15,17,19áâà1,19áâà1,19áâà2
7700000000025350002
21áâà1,25,27
7700000000025350003
1,1áâà2,2áâà2,2áâà7,2áâà9,2ª1,3,3áâà2
7700000000025360001
4,4áâà1,4áâà2,4áâà3,4áâà4,4áâà22
7700000000025360002
8áâà1,8áâà1,8áâà4,8áâà5,9áâà1,9áâà2
7700000000025360003
9áâà3,9áâà4,9áâà6,9áâà7,10áâà1,10áâà2
7700000000025360004
10áâà2,10áâà11,10ª2,10ª11,10ª20
7700000000025360005
10ª22,10ª25,10,11,12áâà1,12áâà2
7700000000025360006
7700000000025360007
12áâà8,12áâà9,12áâà10,12áâà10
7700000000025360008
12áâà10,12áâà10,12áâà11,12áâà12
7700000000025360009
12áâà15,12áâà18,12áâà19,12áâà20,14áâà1
7700000000025360010
14áâà2,14áâà3,14áâà4,14áâà5,14áâà7
7700000000025360011
14áâà8,14áâà9,14áâà10,16,16/14áâà3
7700000000025360012
5,5áâà4,8
7700000000025370001
2,8áâà1,8áâà2,8áâà3,10áâà1,10áâà2
7700000000025380001
10áâà3,10áâà4,10áâà16,10áâà1,10áâà2
7700000000025380002
1,2,2áâà5,2áâà9,2áâà10,2áâà10,2áâà11
7700000000025390001
2áâà12,2áâà14,2áâà15,2áâà16,2áâà17
7700000000025390002
5,5áâà5,5áâà6
7700000000025400001
7700000000025420001
7700000000025420002
1,1/4áâà1,1/4áâà2,1/4áâà3,1/4áâà4
7700000000025420003
1/4áâà6,1/4áâà7,1/4áâà9,1/4áâà10
7700000000025420004
1/4áâà11,1/4áâà13,1/4áâà14,1/4áâà31
7700000000025420005
2/46áâà1,3áâà1,3áâà2,3áâà3,3áâà4,3áâà6
7700000000025420006
3áâà7,3áâà8,3áâà10,3áâà11,3,3,4áâà1
7700000000025420007
4áâà2,5,5áâà3,5áâà5,5áâà6,5,6,6áâà2
7700000000025420008
8áâà1,10,14áâà1,14áâà2,14áâà3,14áâà4
7700000000025420009
14áâà6,14áâà7,14áâà8,14áâà8,14áâà9
7700000000025420010
14áâà10,14áâà12,14áâà15,14áâà17
7700000000025420011
14áâà29,16,16áâà10
7700000000025420012
16áâà1,16áâà2,16áâà3,16áâà4
7700000000025420013
8/12,8/12áâà6,10/12
7700000000025460001
2áâà1,2/34áâà1,6áâà1,10áâà4,12,14
7700000000025460002
7700000000025460003
2áâà2
7700000000025470001
125375
4_10,6,10/13áâà1,10/13áâà2,10/13áâà3
7700000000025470002
10/13áâà4,10/13áâà5,12/14áâà1,14
7700000000025470003
14áâà2,14áâà3,16áâà1,16áâà2,16áâà3,18
7700000000025470004
18áâà5,18_20,20áâà2,22áâà1,22/31
7700000000025470005
2,2,2áâà2,4áâà1,4ª1,4ª1áâà2,4ª1áâà3
7700000000025480001
4ª2,4,4áâà2,4áâà3,6,6áâà2,6áâà3
7700000000025480002
6áâà4,6áâà7,6áâà8,6,10,10ª1,10ª1áâà2
7700000000025480003
3,3áâà2,3áâà3,5,7,9,11ª1,11ª2,11ª2áâà2
7700000000025480004
11ª2áâà3,11ª2áâà4,11ª2áâà5,11ª2áâà6
7700000000025480005
11ª2áâà7,11ª2áâà8,11ª2áâà9,11ª2áâà10
7700000000025480006
11ª2áâà11,11ª2áâà12,11ª2áâà13
7700000000025480007
11ª2áâà14,11ª2áâà15,11ª2áâà16
7700000000025480008
11ª2áâà17,11ª2áâà18,11ª2áâà19
7700000000025480009
11ª2áâà20,11,11áâà2,11áâà3,11áâà4
7700000000025480010
11áâà5,11áâà7,11áâà8,11áâà9
7700000000025480011
11áâà12,11áâà15,11áâà16,11áâà21
7700000000025480012
11áâà21,11áâà28,11ª1,11ª1áâà2
7700000000025480013
11ª1áâà3,11,13,13áâà2,13áâà3,13áâà4
7700000000025480014
7700000000025480015
7700000000025480016
3áâà1,3áâà4,3áâà5,3áâà9,5áâà1,7,9
7700000000025490001
11áâà1,13,17,23,37áâà1,37áâà2,37áâà3
7700000000025490002
37áâà4,47,47áâà9,49,55áâà1,65áâà2
7700000000025490003
65áâà3,69,71/80áâà3,77áâà1,79
7700000000025490004
2/62áâà1,2/62áâà4
7700000000025510001
4áâà3,6áâà1,6áâà2,8,14_16,15áâà1
7700000000025510002
15áâà2,15áâà3,15áâà3,15áâà4,15áâà5
7700000000025510003
15áâà6,15áâà7,15áâà9,15áâà10,15áâà11
7700000000025510004
15áâà14,15áâà17,17áâà1,17áâà2,18
7700000000025510005
19áâà1,19áâà2,20,21áâà1,21áâà4,21áâà5
7700000000025510006
21_21áâà3,21,22áâà1,22áâà2,23áâà1
7700000000025510007
23áâà3,23áâà4,23áâà5,24áâà1,25
7700000000025510008
26/40áâà1,26/40áâà2,26/40áâà3
7700000000025510009
26/40áâà4,26/40áâà5,26/40áâà13,28_30
7700000000025510010
32áâà1,32áâà2,32áâà10,32áâà9,32áâà13
7700000000025510011
1_3,3áâà1,3áâà2,3áâà3,3áâà4,3,3
7700000000025510012
5áâà1,7,7áâà2,7áâà3,7áâà4,7áâà5,7áâà8
7700000000025510013
7áâà13,7áâà17,7áâà22,11áâà1,11áâà2
7700000000025510014
11áâà4,11áâà5,11áâà7,11áâà10,11áâà11
7700000000025510015
11áâà14,11áâà15,11áâà16,11áâà17,11áâà18
7700000000025510016
7700000000025510018
123286
9áâà9,9áâà13,9áâà15
7700000000025510019
14áâà9,14/19ª1,14/19ª2,14/19ª3,14/19ª4
7700000000025520001
14/19ª5,14/19ª7,14/19ª8,16_18áâà1
7700000000025520002
16_18áâà2,22áâà1,22áâà3
7700000000025520003
5/9,11/2,13/3áâà1,13/3áâà3,13/3ª1
7700000000025520005
2,3áâà1,3áâà4,3áâà7,4áâà1,4áâà1
7700000000025520006
5/9áâà2,8áâà1,8áâà2,8áâà3,8áâà5,8áâà6
7700000000025520007
8áâà7,8áâà7,8áâà8,8áâà9
7700000000025520008
3áâà1,3áâà2,3áâà3,3áâà5
7700000000025520004
1/46,2áâà28,2áâà30,2áâà31,2áâà32
7700000000025570001
2ª2áâà1,2/44,2/44áâà1,2/44áâà2
7700000000025570003
2/44áâà3,2/44áâà4,2/44áâà5,2/44áâà6
7700000000025570004
2/44áâà7,2/44áâà8,2/44áâà9,2/44áâà24
7700000000025570005
7áâà1,7áâà2,7áâà3,7áâà4,7áâà5,9ª1,9ª2
7700000000025570006
9ª3,11ª1
7700000000025570007
2/44áâà35,2/44áâà36,4,4ª1áâà5,4ª1áâà6
7700000000025570002
1,1/5áâà2
7700000000025580001
3áâà1
7700000000025610001
1,3,5,5áâà2,5áâà3,5áâà4,5áâà5,7,9,11
7700000000025620001
1,1áâà1,1,3ª1,3ª2,3ª3,3,5ª2,7,7áâà1
7700000000025710001
9ª1,9ª2,9,11ª1,11ª2,11ª2áâà1,11
7700000000025710002
11áâà1,13,15ª2,17,17áâà2,17áâà3
7700000000025710003
1,2,4/24,6áâà2,6ª2,7,7áâà1,7áâà2,8,8áâà1
7700000000025730001
7700000000025770001
13áâà6,13áâà7,13áâà8,13áâà28
7700000000025770002
2,2áâà2,2áâà7,2áâà2,6,13/2áâà1
7700000000025770003
13/2áâà14,13/2áâà15,13/2áâà25
7700000000025770004
13,17
7700000000025780001
1áâà1,4,4,5,5ª1,5ª1áâà1,5ª2,6,6ª1
7700000000025790001
6ª1áâà1,6ª1áâà3,6ª2,6ª2áâà1,7ª1,7ª2
7700000000025790002
7ª2áâà2,10/17,10/17áâà1,11,13/6ª1,15/15
7700000000025790003
3/2áâà1,3/2áâà2,4/1áâà1,5,5áâà2,5áâà2
7700000000025820001
6áâà1,8áâà1,8áâà2,8áâà3,10,10áâà1
7700000000025820002
7700000000025830001
125476
áâà1,áâà2,1,3,5,7,7áâà2,7ª1,9,9ª1áâà1
7700000000025830002
9ª1áâà2,11,11áâà1,13,13áâà1,13áâà2
7700000000025830003
7700000000025830004
7700000000025830005
13áâà15,13áâà18,13áâà59
7700000000025830006
2,2,2áâà3,2áâà4,4ª1,4ª2,4ª3,4ª4,4
7700000000025840001
6ª1,6ª2,6ª3,6ª4,8ª1,8ª2,8ª3,10ª1,10ª2
7700000000025840002
10ª3,10ª4,10,12,14áâà1,14áâà2
7700000000025840003
14áâà3,14áâà6,14áâà7,14áâà8
7700000000025840004
1áâà6,1ª1,1ª2,1ª3,1ª4,1ª4áâà1,1ª5,1ª6
7700000000025890001
1ª6áâà1,1ª6áâà2,1,1áâà1,2,2áâà1
7700000000025890003
2áâà2,2áâà3,3,3áâà1,3áâà2,3ª1,4áâà1
7700000000025890004
4áâà2,5/5,6/3,7,8/4áâà1,8/4áâà2,9
7700000000025890005
9áâà1,10,10áâà1,10áâà2,10áâà3,11/1
7700000000025890006
12/8,13/2,13/2áâà1,13/2áâà2,14,14áâà2
7700000000025890007
15/10,16,16áâà5,16áâà1,16áâà2
7700000000025890008
16áâà3,16áâà4,17,17áâà3,18,18áâà1
7700000000025890009
35áâà12
7700000000025890002
26,26áâà1,26ª2,29,31áâà1,31áâà2,33,35
7700000000025890010
35áâà2,35áâà3,35áâà4,35áâà5,35áâà6
7700000000025890011
35áâà7,35áâà8,35áâà9,35áâà10,35áâà11
7700000000025890012
35áâà12,35áâà12,35áâà13,35áâà14
7700000000025890013
7700000000025890014
7700000000025890015
35áâà23,35áâà24,35áâà25,35áâà26
7700000000025890016
35áâà27,35áâà28,35áâà30,35áâà31
7700000000025890017
35áâà32,35áâà33,35áâà34,35áâà38
7700000000025890018
35áâà39,35áâà40,35áâà41,35áâà42
7700000000025890019
35áâà43,35áâà44,35áâà45,35áâà50,35áâà53
7700000000025890020
56,56áâà1,56áâà2,56áâà3,56áâà4,56áâà5
7700000000025890022
23áâà1,23áâà3,24/9
7700000000025890023
56áâà6,56áâà7,56áâà8,56áâà1,57ª1
7700000000025890024
57ª1áâà1,57ª1áâà2,59,61,61áâà2,61ª1
7700000000025890025
61ª2,63,63áâà1,63áâà4,63áâà7,63áâà9
7700000000025890026
63áâà10,63áâà11,63áâà13,65,65ª1,67
7700000000025890027
28ª1,28ª2,30,32,32áâà1,34,34áâà1
7700000000025890028
35áâà29,35áâà35,35áâà36,35áâà37
7700000000025890029
35áâà47,35áâà48,35áâà49,35áâà52
7700000000025890030
35áâà54,35áâà55,35áâà56,35áâà57
7700000000025890031
35áâà58,35áâà59,35áâà60,35áâà61
7700000000025890032
35áâà62,36,36ª1,37,38,38ª1,39,39áâà1
7700000000025890033
39áâà2,39áâà3,39áâà4,39áâà5,40,40ª1
7700000000025890034
40ª2,40ª2áâà1,42,42áâà1,42áâà2,42ª2,43
7700000000025890035
44,44áâà1,44ª1,44ª2,45áâà1,45áâà2,46
7700000000025890036
67áâà1,67ª1,67ª2,67ª3,67ª4,67ª4áâà1
7700000000025890037
67ª4áâà2,69
7700000000025890038
46áâà2,47/2,48,48áâà1,48ª1,49ª1,49ª2
7700000000025890039
60,70áâà1,71,71ª1,71ª1áâà2,71ª1áâà4
7700000000025890040
49ª2áâà1,49ª3,50,50áâà3,51,51ª1
7700000000025890041
51ª1áâà1,51ª1áâà2,51ª3,51ª4,52,53ª1,55
7700000000025890042
57,57áâà1,57áâà4,57ª1áâà3
7700000000025890043
71ª2,71ª2áâà3,71ª3,71ª2,73ª1,75,75ª1
7700000000025890044
75ª1áâà1,75ª1áâà4,75ª2,75ª3,75ª3áâà2
7700000000025890045
79,80,81áâà1,81áâà3,81áâà4,81áâà5,81ª1
7700000000025890046
81ª2,81ª6,83ª1,83ª2,83ª3,83ª4,83ª5
7700000000025890047
83ª5áâà1,85áâà3,85ª1,85ª2,85ª2áâà1
7700000000025890048
85ª3,85ª4,87,87ª2,87ª2áâà1,89,89áâà4
7700000000025890049
89ª1,89ª2,89ª3,89ª4,89ª5,91,91áâà1
7700000000025890050
103áâà11,103áâà13,103áâà14,103áâà17
7700000000025890051
103áâà18
7700000000025890052
1/11,2,3,4,5,7,8,9,10,12,14,15,16
7700000000025900001
17áâà1,18,19,20,21,22
7700000000025900002
9ª3
7700000000025920001
1ª1,1ª1áâà1,1ª1,1ª2,1ª3,1ª4,1ª5,2,3ª1
7700000000025920002
3ª2,3ª2áâà2,3ª3,3ª4,3ª5,3ª6,3ª7,3ª8
7700000000025920003
3ª9,3ª9áâà2,3ª10,3,3,4,4áâà1,4áâà2
7700000000025920004
5ª1,5ª2,5ª3,5ª3áâà2,5,5ª1,5ª1áâà2,6
7700000000025920005
7ª1,7ª2,7ª3,7ª4,7ª5,7ª6,7ª7,7ª8,7ª9
7700000000025920006
9ª1,9ª2,9ª2áâà2,9ª4,11ª1,11ª2
7700000000025920007
11áâà1,11,11,11
7700000000025920008
17ª1,17ª2,17áâà1,19ª1,19ª2,19ª3
7700000000025920009
19ª3áâà1,21,23,23ª2,25,25áâà2,27ª2,29
7700000000025920010
31ª1,31ª2,33,35,37,39,41,43,43áâà2,43
7700000000025920011
43ª2,45ª1,45ª1áâà1,45ª2,47,47
7700000000025920012
53,57,59,59áâà1,61ª1,61ª2,61ª2áâà1
7700000000025920013
61ª2áâà2,61ª2áâà3,63/20,65/15,67,69,71
7700000000025920014
49,51,51ª1,51ª2,51ª2áâà1,51ª3,51ª4
7700000000025920015
51ª4áâà1,51ª5,51ª5áâà1,51ª5áâà2
7700000000025920016
24ª1,24ª1áâà1,24áâà1,24áâà2,24áâà3
7700000000025920017
24áâà4,24áâà6,26áâà1,26áâà2,26áâà3
7700000000025920018
28,28áâà8,28ª1,28ª1áâà1,28ª2,28ª2áâà2
7700000000025920019
28ª3,28ª3áâà1,28ª4,28ª5,28ª5áâà1,28ª6
7700000000025920020
28ª7,28ª7áâà1,28ª8,28,28,30
7700000000025920021
40áâà1,40áâà2,42áâà1,42ª1,44ª1,44ª2
7700000000025920022
44ª3,44ª4,44ª4áâà1,44ª4áâà2,44ª5,46ª1
7700000000025920023
46ª2,46ª2áâà1,46ª3,46ª4,46ª5,46ª5áâà1
7700000000025920024
46ª6,46ª7,48ª1,48ª2,48ª2áâà2
7700000000025920025
50/11,52,52áâà1
7700000000025920026
56,56/40áâà1,56/40áâà2,56/40áâà3
7700000000025920027
10áâà2,10áâà3,10áâà4,10áâà8,10áâà9
7700000000025920028
10ª1,10ª1áâà1,10ª2,10ª3,10ª4,11
7700000000025920029
11áâà1,12ª1,12ª2,12ª3,12ª3áâà1,12ª4
7700000000025920030
12,12áâà1,12áâà2,13ª1,13ª2,13ª2áâà1
7700000000025920031
13ª3,13ª4,13ª4áâà1,14ª1,14ª1áâà1
7700000000025920032
14ª1áâà3,14ª2,15ª1,15ª2,15ª3,15ª4
7700000000025920033
15ª4áâà1,15ª4áâà3,16,18,18,20,20,20
7700000000025920034
7700000000025920035
8áâà1,8áâà2
7700000000025920036
73,73áâà1,73áâà2,73áâà3,75ª1,75ª2,77ª1
7700000000025920038
77ª2,77ª3,77ª4,79,81,83ª1,83ª2
7700000000025920039
83ª2áâà1,83ª2áâà2
7700000000025920040
32,34,36,36áâà1,38
7700000000025920041
85,85áâà1,89áâà1
7700000000025920042
64áâà1
7700000000025920043
62áâà1,95áâà1,95,99áâà1,99áâà1
7700000000025920045
99áâà2,99áâà3,101áâà1
7700000000025920046
66,66áâà2,66áâà3,66áâà4,66áâà5,66áâà6
7700000000025920047
66áâà7,66áâà8,66áâà9
7700000000025920048
2,2,4,4,4,6,6áâà2,6,6áâà1,8,10
7700000000025930001
10,12,12,12áâà1,12áâà2,12,14,14
7700000000025930002
1,1,3,3ª1,3ª1áâà1,3ª1áâà2,3ª2,5
7700000000025930003
5áâà1,5áâà2,7,7ª1,7,7,7,7áâà1
7700000000025930004
7áâà2,9,9,9áâà1,9áâà2,11,13,15,17
7700000000025930005
17,17,19,19áâà1,19,19,21,21
7700000000025930006
9,11ª1,11ª1áâà1,11ª1áâà2,11ª2,13ª1
7700000000025960001
13ª1áâà1,19,19áâà1,19áâà2,20,20,21
7700000000025960002
áâà17,2ª1,2ª1áâà1,2ª2,2,3,4ª1,4ª2
7700000000025970001
4ª2áâà2,5ª1,5ª2,6ª2,7ª1,7ª2,8áâà1
7700000000025970002
8áâà2,8ª1,8ª2,9ª1,9ª2,10ª2,10ª2áâà1
7700000000025970003
10áâà1,12,12áâà3,12,13ª1,13ª2
7700000000025970004
13ª2áâà2,13ª2áâà3,13,13áâà1,15ª1
7700000000025970005
15ª2,15ª2áâà2,17,17ª1,17ª2
7700000000025970006
24/1áâà1,24/1áâà2,26,28
7700000000026000001
2,4,6,7,7áâà2,8/2,8/2áâà1,8/2áâà2
7700000000026000002
8/2áâà3,10/1,12ª1,12ª2,12ª2áâà2,13áâà1
7700000000026000003
14,16áâà1,20,20áâà2,22/2,22/2áâà1
7700000000026000004
32,32áâà2,34,36
7700000000026000006
9áâà20,9áâà21,11áâà5,11ª1,11ª2,11ª3
7700000000026010001
30áâà1,30ª2
7700000000026010002
2,2áâà1,4áâà1,4áâà2,4áâà4,4áâà5,4áâà6
7700000000026010003
7700000000026010004
7700000000026010005
4áâà18,4áâà19,4áâà20,4áâà21,4áâà26
7700000000026010006
4áâà27,5,5áâà1,6áâà1,6áâà3,7áâà2,7áâà4
7700000000026010007
7ª1,7/1,8,8áâà1,8áâà2,9,9áâà1,9áâà3
7700000000026010008
7700000000026010009
9áâà10,9áâà11,9áâà12,9áâà13,9áâà14
7700000000026010010
7700000000026010011
11ª4,12áâà1,12áâà3,12áâà4,12áâà6
7700000000026010012
7700000000026010013
14ª1,14ª1áâà1,14ª2,14ª2áâà1,15áâà3
7700000000026010014
12áâà17,12áâà27,12áâà29,12áâà30
7700000000026010015
12áâà31,12áâà35,12ª1,12ª2,12ª3,12ª4
7700000000026010016
12ª5,12ª6,12ª7,12ª8,12ª9,12ª10,12ª11
7700000000026010017
12ª12,12ª13,12ª14,12ª15,12ª16,12ª17
7700000000026010018
12ª18,12ª19,12ª20,12ª21,12ª22,12ª23
7700000000026010019
12ª26,12ª27,12ª28,12ª29,12ª30,12ª31
7700000000026010020
12ª32,12ª35,12ª37,12ª56,12ª74,12áâà1
7700000000026010021
7700000000026010022
7700000000026010023
12áâà1,12áâà2,12áâà3,12áâà4
7700000000026010024
12áâà5,12áâà6,12áâà7,12áâà8
7700000000026010025
12áâà9,12áâà10,12áâà17,12áâà18
7700000000026010026
12áâà19,12áâà21,12,12áâà1,12áâà2
7700000000026010027
12áâà3,12áâà4,12áâà5,13,13ª1,13ª2
7700000000026010028
13ª3,13ª3áâà2,13ª4,13ª4áâà2,13ª5,13ª15
7700000000026010029
15áâà4,15áâà5,15áâà6,15ª1,15ª2,16ª1
7700000000026010030
16ª2,16,16áâà1,16áâà2,16áâà3
7700000000026010031
16áâà4,16áâà5,17,17áâà9,17ª1,17ª2
7700000000026010032
17ª3,17ª4,17ª5,17ª6,17ª7,18ª1,18ª2
7700000000026010033
18ª3,18ª4,18ª4áâà2,18ª5,19,19áâà1
7700000000026010034
19áâà2,19áâà3,19áâà4,19ª2,19ª3,20ª1
7700000000026010035
20ª1áâà1,20ª2,20ª2áâà3,20ª3,21áâà1
7700000000026010036
7700000000026010037
21áâà7,21áâà8,22ª1,22ª1áâà1,22ª1áâà2
7700000000026010038
22ª1áâà3,24,26,26áâà1,26áâà2,26áâà3
7700000000026010039
7700000000026010040
26áâà15,26áâà22,26áâà23,26áâà24,28
7700000000026010041
29áâà7,29áâà8,29áâà1,29áâà2,29áâà3
7700000000026010043
29áâà4,29áâà5,29áâà6,29áâà7
7700000000026010044
29áâà8,35áâà10,35áâà14,35áâà20
7700000000026010045
35áâà99,35áâà100,35áâà106,35áâà108
7700000000026010046
35áâà113,35áâà114,35áâà115,35áâà117
7700000000026010047
35áâà121,35áâà122,35áâà123,35áâà124
7700000000026010048
35áâà125,35áâà126,35áâà127,35áâà182
7700000000026010049
35áâà183,35áâà184,35áâà185,35áâà201
7700000000026010050
35áâà205,35áâà214,35áâà215,35áâà216
7700000000026010051
35áâà217,35áâà218,35áâà222,35áâà224
7700000000026010052
35áâà225,35áâà226,35áâà279,35áâà309
7700000000026010053
35áâà427,35áâà428,35áâà429,35áâà431
7700000000026010054
35áâà432,35áâà433,35áâà443,35áâà606
7700000000026010055
29,29áâà2,35áâà35,45áâà1
7700000000026010056
32,35áâà1,35áâà2,35áâà3,35áâà5
7700000000026010057
7700000000026010058
41,43áâà1,43áâà2,43áâà3
7700000000026010059
7700000000026010060
32,34,34,34áâà1,34áâà2,36áâà1
7700000000026010061
7700000000026010062
36áâà7,36áâà8,36áâà9,36áâà10,36áâà11
7700000000026010063
36áâà12,36,38,40áâà1,40áâà2,40áâà3
7700000000026010064
40áâà4,40áâà5,42áâà1,42áâà2,46áâà1
7700000000026010065
7700000000026010066
46áâà12,56áâà1,56áâà2,56áâà3,56áâà4
7700000000026010067
56áâà5,62,62áâà1,64áâà1,64áâà4
7700000000026010068
64áâà5,64áâà6,64áâà10,64,66áâà4
7700000000026010069
2,2áâà1,2áâà2,2áâà3,2áâà4,3,5
7700000000026020001
2,2áâà1,2/11áâà1,4áâà1,4áâà2,4áâà3,4ª1
7700000000026030001
4ª2,4ª3,4ª4,6áâà1,6áâà2,6áâà3,6áâà4
7700000000026030002
6áâà5,6áâà6,6áâà7,6áâà9
7700000000026030003
42,42áâà1,42áâà2,42áâà3,42áâà4,42áâà6
7700000000026050001
42áâà7,42áâà8,42áâà9,42áâà10,42áâà11
7700000000026050002
42áâà12,42áâà12,42áâà13,42áâà14
7700000000026050003
42áâà15,42áâà16,42áâà17,42áâà18
7700000000026050004
42áâà19,42áâà21,42áâà22
7700000000026050005
10,10áâà2,10áâà8,10áâà12,10áâà13
7700000000026050006
10áâà21,10_12ª8,15áâà1,16,16áâà12,20
7700000000026050007
20,20áâà1,21,23,24,24áâà1,26,26áâà1
7700000000026050008
26áâà2,26áâà7,27áâà3,27ª1,27ª2,28
7700000000026050009
29áâà3,29/2,31ª1,31ª2,32,32áâà1,32áâà3
7700000000026050010
7700000000026050011
32áâà9,32áâà10,32áâà13,38,38áâà2
7700000000026050012
38áâà3,38áâà12,38áâà13,40,40áâà2
7700000000026050013
40áâà2,40áâà3,40áâà4,40áâà5,40áâà13
7700000000026050014
40áâà18,40áâà25,40áâà26,40áâà27
7700000000026050015
40áâà28,40áâà29,40áâà30,40áâà31
7700000000026050016
40áâà32,40,43,43áâà2,43áâà3,45,49
7700000000026050017
49áâà9,49ª1,49ª3,49,49,50,50áâà1
7700000000026050018
50áâà2,52,55,55áâà2,55áâà4,55ª2,55ª4,55
7700000000026050019
11áâà5,11áâà9,11áâà10,11áâà11,11áâà12
7700000000026050020
10áâà11,11áâà1,11áâà2,11áâà3,11áâà4
7700000000026050021
15,17
7700000000026050022
1áâà1,1áâà2,1áâà3,3áâà2,3áâà3,3áâà4
7700000000026060001
3áâà5,3áâà6,3áâà7,3áâà8,3áâà9,3áâà10
7700000000026060002
3áâà11,3áâà13,3áâà14,3áâà15,3áâà17
7700000000026060003
3áâà23,3áâà30,3áâà31,3áâà37,3áâà1
7700000000026060004
7700000000026060005
7700000000026060006
5áâà9,5áâà10,5áâà10,5áâà11,5áâà12
7700000000026060007
9áâà1,9áâà2,9áâà3,9áâà4,9áâà4,9áâà5
7700000000026060008
9áâà6,9áâà6,9áâà7,9áâà8,9áâà9,9áâà10
7700000000026060009
9áâà12,9áâà13,9áâà14,9áâà14,9áâà14
7700000000026060010
9áâà14,9áâà14,11,11/2áâà3,11/2áâà4
7700000000026060011
11/2áâà7,11/2áâà16,11/2áâà17,11/2áâà18
7700000000026060012
11/2áâà20,11/2áâà21,11/2áâà22
7700000000026060013
11/2áâà29,11áâà1,11áâà2,11áâà3
7700000000026060014
11áâà4,11áâà5,11áâà6,11áâà7
7700000000026060015
11áâà8,11áâà10,11áâà14,11áâà17
7700000000026060016
11áâà18,11áâà20,13,13áâà2,13áâà8,15
7700000000026060017
15/17áâà4,15/17áâà7,15/17ª1,15/17ª2
7700000000026060018
15/17ª3,15/17ª4,15/17ª4áâà1,15/17ª5
7700000000026060019
15/17ª6,15/17ª7,15
7700000000026060020
6,6áâà1,10,10áâà1,12,12áâà2,12áâà3,16
7700000000026060021
16áâà1,28,28áâà2,28áâà3,28áâà4,28áâà5
7700000000026060022
28áâà6,28áâà7,28áâà8,28áâà10,28áâà11
7700000000026060023
28áâà12,28áâà13,28áâà14,30,30áâà1
7700000000026060024
7700000000026060025
30áâà7,30áâà8,30áâà10,30áâà11,30áâà12
7700000000026060026
7700000000026060027
30áâà17,30áâà18,30áâà20,30áâà21,30áâà22
7700000000026060028
7700000000026070001
1/4áâà8,1/4áâà9,1/4áâà10,1/4áâà11
7700000000026070002
2/1áâà1,2/1áâà2,2/1ª2,3áâà13,3áâà13
7700000000026070003
3/1áâà9,3/1áâà11,3/1áâà16,3/1áâà17
7700000000026070004
3/1ª1,3/1ª2,3/1ª2,3/1ª3,3/1ª4,3/1ª5
7700000000026070005
3/1ª6,3/1ª7,5áâà1
7700000000026070006
1,1áâà2,1,2,4,4áâà2,4áâà3,7,7áâà13
7700000000026080001
7ª1,7ª8,7ª10,7ª15,7ª17,7ª17,7ª19
7700000000026080002
3áâà1,4,4,6,6áâà3,6ª8,6,6áâà1,6
7700000000026090001
6áâà1,6,6áâà2,6áâà3,6áâà4,6
7700000000026090002
6áâà1,6áâà1,8,8áâà2,8ª2,10ª1,10ª2
7700000000026090003
10ª3,10ª4,10ª5,10,10áâà1,10áâà2
7700000000026090004
10áâà3,10áâà4,10áâà20,10áâà21
7700000000026090005
10áâà22,10áâà23,10áâà24,10,10
7700000000026090006
10áâà3,10áâà4,10áâà5,10áâà6
7700000000026090007
10áâà7,10áâà9,10,10áâà1,12,12áâà2
7700000000026090008
4,4áâà1,4áâà2,4áâà3,6,6áâà13,11,15
7700000000026100001
15áâà3,18,18,19,21
7700000000026100002
2,2áâà2,2áâà11,2áâà16,2áâà18,2áâà19
7700000000026130001
2áâà1,5/16
7700000000026130002
5,5áâà1,5áâà1,9,10,11,15,18
7700000000026150001
19/22áâà1,19/22áâà3,20,24áâà5,24áâà6
7700000000026150002
1/2,3,3ª1,5,5áâà1,5áâà3,5áâà10,7,9ª1
7700000000026160001
9ª2,9ª3,21áâà1,21áâà2,21áâà3,21áâà4
7700000000026160002
21áâà5,21áâà6,21áâà7,21áâà8,27áâà1
7700000000026160003
áâà18,2,2áâà1,2áâà1,2áâà2,2áâà3
7700000000026160004
7700000000026160005
2áâà10,2ª1,2,2áâà1,2áâà2,2áâà3
7700000000026160006
4áâà1,4áâà3,4áâà4,4áâà5,4áâà6,4áâà22,6
7700000000026160007
6áâà1,6áâà2,6áâà3,6áâà4,6áâà5,6áâà10
7700000000026160008
7700000000026160009
8áâà8,8áâà11,8áâà12,10áâà1,10áâà2
7700000000026160010
12áâà1,12áâà2,12áâà3,14áâà1,14áâà2
7700000000026160011
14áâà3,14áâà4,14áâà5,14áâà6,14áâà9
7700000000026160012
7700000000026160013
14áâà14,14áâà15,14áâà16,14áâà21
7700000000026160014
7700000000026160015
14áâà26,14áâà29,14áâà31,14,14áâà1
7700000000026160016
7700000000026160017
14áâà6,14áâà1,14áâà2,14áâà3
7700000000026160018
14áâà4,14áâà5,14áâà6,14áâà7
7700000000026160019
14áâà8,14áâà9,14áâà6,14áâà1
7700000000026160020
14áâà2,14áâà3,14áâà5,14áâà8
7700000000026160021
14áâà10,14áâà12,14,14,16,16áâà2
7700000000026160022
16,20,20
7700000000026160023
11,27,27,29,29áâà1,29áâà2,29áâà3
7700000000026170001
1áâà1,1áâà3,1áâà10,1áâà11,2,3áâà1
7700000000026180001
3áâà2,3áâà3,3áâà11,4áâà1,4/3áâà2
7700000000026180002
4/3áâà3,5áâà1,5áâà2,5áâà3,6áâà1,7áâà1
7700000000026180003
9,11/12,12áâà1,12áâà3,15
7700000000026180004
7700000000026190001
4áâà8,4áâà10,4áâà11,4áâà14,5
7700000000026190002
3,5áâà2,5áâà5,5ª1,5ª2,5ª3,10
7700000000026200001
5áâà4
7700000000026230001
1áâà1,1áâà2,1áâà1,2,2áâà1,2áâà2,2áâà3
7700000000026230002
2áâà4,3áâà2,3áâà4,4,4áâà5,4,5áâà1
7700000000026230003
5áâà1,5áâà2,5áâà3,5,6,6ª1,6ª1áâà1
7700000000026230004
8áâà1,8áâà2,12
7700000000026230005
3_5,5,5áâà2,6
7700000000026240001
4/3,5,6/5,7,8/7áâà2,10/9,12/11áâà2
7700000000026250001
12/11áâà6,13áâà1,13áâà5,14/13áâà1
7700000000026250002
14/13áâà2,14/13áâà8,15áâà3,15áâà4
7700000000026250003
15áâà5,16/15áâà1,16/15áâà2,16/15áâà5
7700000000026250004
17áâà1,17áâà2,17áâà3,19/37áâà1
7700000000026250005
19/37áâà2,19/37áâà4,19/37áâà5,21
7700000000026250006
22/21áâà3,23,24áâà3,24/21áâà1
7700000000026250007
24/21áâà2,25áâà1,25áâà2,25áâà3,25áâà7
7700000000026250008
25áâà12,25áâà14,26áâà1,27,27áâà1
7700000000026250009
27áâà4,27áâà6,27áâà7,27áâà8,27áâà9
7700000000026250010
27áâà10,27áâà11,27áâà16,27áâà17
7700000000026250011
27áâà18,27áâà21,29,30áâà1,30áâà2
7700000000026250012
30áâà3,31,31áâà2,31áâà12,31áâà15
7700000000026250013
31ª1,31ª2,31ª3,31ª4,31ª5,31ª6,31ª9
7700000000026250014
31ª10,31ª11,31ª12,31ª14,32áâà1,32áâà2
7700000000026250015
34ª4,34ª5,34ª6,34_36áâà3,36,36áâà3
7700000000026250016
36áâà4,38áâà2,38ª4,38ª8,40áâà1,40áâà2
7700000000026250017
44,44áâà2,46áâà2,46áâà14,46áâà34,46ª9
7700000000026250018
46ª10,46ª13,46ª16,46ª17,46ª18,48áâà1
7700000000026250019
35,35áâà1,35áâà2,35áâà3,35áâà4,35áâà5
7700000000026250021
7700000000026250022
7700000000026250023
35áâà15,56,58,60,60,62,62áâà2,62áâà5
7700000000026250024
62áâà7,62ª2,64
7700000000026250025
1,3,3ª1,4,5,5áâà2,6,7,7áâà2,7áâà3
7700000000026290001
7áâà4,8,8áâà2,9,11,13,13,14,14áâà2
7700000000026290002
14áâà3,16,17,17áâà2,17ª1,19,19áâà1
7700000000026290003
7700000000026290004
19áâà7,19áâà8,19áâà9,19áâà10,19áâà11
7700000000026290005
19áâà12,19áâà15,19áâà16,19áâà17
7700000000026290006
19áâà18,19áâà19,19áâà21,19áâà29,21,25/31
7700000000026290007
18/28,20,20áâà2,20áâà3,22ª1,22ª2,22ª3
7700000000026290015
24ª1,24ª2,26,28,30
7700000000026290016
7áâà1,7áâà2
7700000000026300001
2,4,6,6,6áâà1,6áâà2,8,10,12áâà2
7700000000026310001
12ª2,16áâà3,16ª1,16ª2,16ª2áâà3,16,18
7700000000026310002
20,22,24,24ª2,24ª2áâà1,26,28,30,32
7700000000026310003
32áâà1,32ª2,38,40
7700000000026310004
42,42áâà2
7700000000026310005
1áâà1,1áâà2,1áâà3,3,5,6áâà2,6áâà6,10
7700000000026330001
119136
7700000000026330003
7700000000026330004
10áâà12,10áâà13,10áâà16,10áâà20,10
7700000000026330005
10áâà1,10áâà2,10áâà3,10áâà1
7700000000026330006
10áâà2,10áâà3,10áâà4,12,16/2,16
7700000000026330007
10
7700000000026330002
4,5,9,9ª1,11,11áâà1,12ª1,12ª2,13
7700000000026340001
13áâà2,13ª2,15,17,19,21,25,25áâà1
7700000000026340002
1,3,3áâà1,4,6,8,10,13,16
7700000000026350001
10áâà2,18,20
7700000000026360001
3,3áâà1,5,7,7ª1,7ª2,7ª2áâà1,7,9,9áâà1
7700000000026400001
9áâà2,9áâà3,11,13,13áâà2,15,17,19,21
7700000000026400002
2ª1,2ª2,2ª2áâà1,2,4ª1,4ª1áâà1,4ª1áâà3
7700000000026400003
4ª2,4ª3,4ª3áâà1,4ª4,6ª1,6ª2,29
7700000000026400004
12,12áâà2,14,20,20áâà6,20áâà7,26áâà1
7700000000026410001
26áâà4,26áâà5,26áâà6,30áâà1,30áâà2
7700000000026410002
30áâà4,32,34áâà1,34áâà2,36/18
7700000000026410003
38/19áâà3,42áâà1,42áâà2,42áâà3,42áâà5
7700000000026410005
44/28
7700000000026410006
9,9áâà2,15/25,19,21,25/9áâà1,27
7700000000026410007
29/16,29/16áâà5,31/13,33,35,37/16,39
7700000000026410008
41áâà1,41áâà2,41áâà3,41áâà4,41áâà6,43
7700000000026410009
45áâà1,45áâà2,45áâà3
7700000000026410010
4,6/2
7700000000026410011
7700000000026410004
3áâà1,3áâà2,3áâà3,3áâà4,5áâà1,5áâà2
7700000000026420001
5áâà3,7,7áâà1,7áâà2,7áâà3,7áâà4
7700000000026420002
7áâà5
7700000000026420003
9áâà3,9áâà4,9,9,12áâà1,12áâà2
7700000000026420004
12áâà3,13áâà1,13áâà2,13áâà3,13áâà4
7700000000026420005
7700000000026420006
13áâà14,13áâà15,13áâà1,13,13,14
7700000000026420007
7700000000026420008
1,1,4,6,8,8áâà1,9,9áâà1,9áâà2
7700000000026420009
7700000000026420010
7700000000026420011
7700000000026420012
16áâà13,16áâà14,16áâà16,16áâà19
7700000000026420013
7700000000026420014
16áâà24,16áâà25,16áâà27,16áâà28
7700000000026420015
16áâà30,16áâà31,16áâà32,16áâà33
7700000000026420016
16áâà34,16áâà35,16,16áâà2,16áâà3
7700000000026420017
16áâà4,16áâà5,16áâà6,16áâà8
7700000000026420018
16áâà9,16áâà1,16áâà2,16áâà3
7700000000026420019
16áâà4,16,16,16,16áâà1,16áâà2,17
7700000000026420020
18,19áâà1,19áâà1,19áâà2,19áâà3,19áâà4
7700000000026420021
7700000000026420022
7700000000026420023
19áâà14,20áâà1,20áâà2,20áâà3,20áâà4
7700000000026420024
20áâà5,20áâà6,21áâà1,21áâà2,21áâà3
7700000000026420025
21áâà4,21áâà5,21áâà6,21áâà7,21,23
7700000000026420026
23áâà6,23áâà7,35áâà9,35áâà36,35áâà1
7700000000026420027
35áâà2,35áâà3,35áâà4,35áâà5,37
7700000000026420028
37áâà11,37áâà1,37áâà2,37áâà3
7700000000026420029
37áâà4,37áâà5,37áâà6,37áâà8
7700000000026420030
37áâà9,37,37áâà1,37áâà2,37áâà3
7700000000026420031
6áâà1,6áâà2,8áâà1,8áâà2,8áâà3,8áâà4
7700000000026430001
8áâà5,8áâà6,8áâà7,8áâà8,8áâà9,8áâà18,9
7700000000026430002
9áâà2,9áâà3,9áâà9,10,10áâà1,10áâà2
7700000000026430003
10áâà3,10,11áâà1,11áâà2,11áâà3,11áâà4
7700000000026430004
11áâà5,11áâà6,11áâà7,11áâà8,11ª2
7700000000026430005
12áâà1,12áâà2,12ª1,13,13áâà2,13áâà3
7700000000026430006
13áâà12,13áâà13,13áâà16,13áâà17
7700000000026430007
13áâà18,13áâà22,13áâà23,13áâà24
7700000000026430008
13áâà25,13áâà26,13áâà27,13áâà28
7700000000026430009
13áâà29,13áâà30,13áâà31,13áâà33
7700000000026430010
7700000000026430011
7700000000026430012
13áâà46,13áâà48,13áâà49,14,14áâà1,19/2
7700000000026430013
19/2áâà26,19/2áâà28,19/2áâà29
7700000000026430014
19/2áâà31,19/2áâà31,25áâà1,25áâà5
7700000000026430015
25áâà6,25áâà7,25áâà8,27,27áâà2,27áâà4
7700000000026430016
27áâà5,27áâà6,27áâà9
7700000000026430017
áâà1,7ª1,7ª2áâà1,7ª2áâà2,7ª2áâà3
7700000000026440001
7ª2áâà4,7ª2áâà5,7ª2áâà6,7ª2áâà7
7700000000026440002
7ª2áâà8,7ª2áâà9,7ª2áâà10,7áâà2,7áâà3
7700000000026440003
7700000000026440004
7áâà9,7áâà10,7áâà12,7áâà13,7áâà14
7700000000026440005
7áâà19,8,10/16,14,14áâà6,14áâà9
7700000000026440006
14áâà13,14ª1áâà20,14ª2áâà14,14ª5áâà2
7700000000026440007
14ª7áâà4
7700000000026440008
9,9áâà2,9áâà3,9áâà5,9áâà8,9áâà10
7700000000026440009
9áâà11,9áâà12,9áâà13,11áâà1,11áâà2
7700000000026440010
11áâà3,11ª2,13áâà1,13áâà2,13áâà3
7700000000026440011
13áâà4,13áâà5,13áâà6,22,22áâà2,22áâà4
7700000000026440012
7700000000026440013
22áâà10,22áâà11,22áâà24,34áâà1,34áâà2
7700000000026440014
34áâà10,36ª2,36ª2áâà1,36ª2áâà2
7700000000026440015
36ª2áâà3,36ª2áâà4,36ª2áâà5,36
7700000000026440016
1áâà2,1áâà3,1áâà4,1ª1,1,1áâà1,3
7700000000026450001
3áâà2,3áâà3,3áâà4,3áâà5,3áâà6,3áâà7
7700000000026450002
3áâà8,3áâà9,4ª1,4ª1áâà1,4ª1áâà2
7700000000026450003
4ª1áâà3,4ª1áâà4,4ª1áâà5,4ª1áâà6,4ª2
7700000000026450004
4ª2áâà2,4ª2áâà3,4ª2áâà4,4ª2áâà5
7700000000026450005
4ª2áâà6,4ª2áâà7,4ª2áâà8,4ª2áâà9
7700000000026450006
4ª2áâà10,4ª2áâà11,4ª2áâà12,4ª2áâà13,6
7700000000026450007
6ª1,6ª1áâà1,6ª1áâà3,6ª1áâà4,6ª1áâà5
7700000000026450008
6ª1áâà6,6ª1áâà7,6ª1áâà8,6ª1áâà9
7700000000026450009
6ª1áâà10,6ª1áâà11,6ª1áâà12,6ª1áâà13
7700000000026450010
6ª1áâà14,8,8áâà1,9,9áâà1,9áâà2,9áâà3
7700000000026450011
9áâà5,9áâà6,9áâà7,9áâà8,9áâà9,9áâà10
7700000000026450012
7700000000026450013
7700000000026450014
9áâà23,9áâà24,9áâà25,9áâà26,9áâà27
7700000000026450015
9áâà28,9áâà29,10,10áâà2,10áâà3,10áâà4
7700000000026450016
7700000000026450017
7700000000026450018
7700000000026450019
10áâà19,10áâà20,10áâà21,10áâà26
7700000000026450020
10áâà29,10áâà30,10áâà31,10ª2áâà1,10áâà1
7700000000026450021
1,1áâà1,1áâà2,1áâà3,1áâà5,1áâà6,1áâà7
7700000000026460001
7700000000026460002
7700000000026460003
7700000000026460004
7700000000026460005
7700000000026460006
7700000000026460007
1áâà39,1áâà40,1áâà41,1áâà42,1áâà49
7700000000026460008
1áâà50,1áâà51,1áâà52,1áâà53,1áâà54,2
7700000000026460009
2áâà5,3,3ª1,3ª2,3ª3,4
7700000000026460010
11,20,22,28
7700000000026470001
17ª1,17ª1,17ª2,17,19,19ª1,19ª2,19
7700000000026510001
19,23,25ª1,25ª2,25ª3,25ª4,25,25ª1
7700000000026510002
25,25,27,29ª1,29ª1áâà1,29ª1áâà2,29ª3
7700000000026510003
29ª4,29ª8,29ª8,31
7700000000026510004
14,14áâà1,14áâà2,14ª1,14ª3,14ª4,16ª1
7700000000026510005
16ª2,16ª3,16ª3áâà1,16ª4,16ª5,18ª1,18ª2
7700000000026510006
18ª2áâà1,20,20ª1,20ª2,20ª2áâà1,20ª3
7700000000026510007
20,20áâà1,22,22áâà1,22ª1,22ª1áâà1
7700000000026510008
22ª2,22ª3,24ª1,24ª2,24ª2áâà1,24ª3
7700000000026510009
24ª3áâà1,24ª4,24ª4áâà1,24ª4áâà2
7700000000026510010
1,3,3áâà2,3,7ª,7ª,9,9ª,9ª,9ªáâà2
7700000000026510011
9ª4,11,11ª1,11/12áâà18,11/12áâà29
7700000000026510012
11/12áâà45,13,13ª,13áâà2,13áâà3
7700000000026510013
13áâà3,15,15ª,15ª1,15ª2,15ª3,15ª4
7700000000026510014
15ª4áâà2,15ª5
7700000000026510015
2,2,2áâà2,2áâà3,2,2áâà1,2áâà2,4
7700000000026510016
4,4áâà1,4áâà2,4áâà3,6/1,8,10ª1
7700000000026510017
10ª2,10ª3,10ª3áâà1,12ª1,12ª2,12ª3
7700000000026510018
33ª1,33ª2,35ª1,35ª2,37ª1,37ª2
7700000000026510019
1,3,3áâà2,4,5,6,7,7áâà1,7áâà2,7áâà3,8
7700000000026520001
9,9áâà1,9áâà2,10,12,14,14ª2,14ª2áâà2
7700000000026520002
14ª2áâà3,16ª1,16ª2,18,18áâà2,18áâà3
7700000000026520003
1áâà1,1áâà4,2,2,2áâà1,2áâà2,3áâà2
7700000000026530001
4,4áâà1,4áâà2,4áâà3,5,5áâà2,7
7700000000026530002
8áâà1,9,10,11,13,15,17,21,23,25,27,29
7700000000026530003
29áâà1,29áâà2,31,33,35,37,39,41,43,45
7700000000026530004
45,47,47,49,49áâà1,49áâà1,49áâà2
7700000000026530005
7700000000026530006
1,2áâà2,3,4áâà1,4,5,6,7,9,10,11
7700000000026560001
11áâà21,12,14,16,18,20,22,24,26,28,30,32
7700000000026560002
34ª1,34ª2,36,36áâà2,38,40ª1,40ª2
7700000000026570001
42/22ª1,42/22ª2,42/22ª3,44,44ª1,44
7700000000026570002
46/35ª1,46/35ª2,46/35ª3,46/35ª4
7700000000026570003
2,2áâà1,2áâà1,2áâà2,2áâà3,4,4áâà1
7700000000026570004
4áâà3,4áâà4,4áâà5,4áâà6,4áâà9,4áâà12
7700000000026570005
7700000000026570006
7700000000026570007
7700000000026570008
4áâà28,4áâà29,4áâà30,4áâà31,4áâà32
7700000000026570009
4áâà33,4áâà34,4áâà35,4áâà36,4áâà37
7700000000026570010
4áâà38,4ª1,4ª2,4ª3,4/23,4,4áâà1,4
7700000000026570011
4,4
7700000000026570012
1ª1,1ª2,1ª3,1ª4,1ª5,1ª5áâà1,1áâà1,3
7700000000026570013
3ª1,3ª2,3ª3,3ª3áâà1,3ª4,3ª5,3ª5áâà1
7700000000026570014
31,31áâà2,37/40,39,41,43,43,43áâà1
7700000000026570015
43áâà2,45,47
7700000000026570016
20,28,30,30áâà1,30,32,32
7700000000026570017
6áâà1,6áâà3,6ª1,6ª2,8,8,8,12ª1,12ª2
7700000000026570018
14áâà4,14ª1,14ª2,14ª3,16ª1,16ª2
7700000000026570019
7,9,9,11ª1,11ª2,11ª3,13,15,15,21,21
7700000000026570020
23,23,23áâà2,25,25áâà2,25,25áâà2
7700000000026570021
27áâà1,27ª1,27ª2,27ª3,29ª1,29ª2,29/45ª3
7700000000026570022
50,50áâà2,52,52áâà2,52,52áâà1,54
7700000000026570023
54áâà2,54áâà3,54áâà5,56,58,58,60,62
7700000000026570024
62ª1,62ª1áâà1,62ª1áâà2,62,62áâà4
7700000000026570025
62áâà5,62áâà7,62áâà8,64/31,64,66
7700000000026570026
66áâà2,68,70,70ª1,72,72áâà3,72ª1
7700000000026570027
51,51áâà1,53,55,57,59,59áâà1,63,65ª1
7700000000026570028
65ª2,65ª3,65ª4,65ª5,67áâà1,67ª1,67ª2
7700000000026570029
69ª1,69ª2,69ª3,69ª4,69ª5,69,71ª1,71ª2
7700000000026570030
71,71áâà1,73áâà4,73ª1,73ª2,73ª3,75
7700000000026570031
75/33,77,83,83,85,85áâà2,85áâà3
7700000000026570032
7700000000026570033
85áâà9,85áâà10,85áâà11,85áâà12,85áâà1
7700000000026570034
7700000000026580001
3áâà1,3áâà6,3áâà8,4ª1,4ª2,5,5áâà2
7700000000026590001
5áâà3,5áâà4,7/21,9,9áâà2,13ª1,13ª2,14
7700000000026590002
15áâà1,15ª1,15ª2,15ª2áâà2,16,16áâà1
7700000000026590003
16áâà2,17áâà1,17áâà2,17áâà3,18,18,19
7700000000026590004
19áâà1,19áâà2,19áâà3,19áâà4,19áâà9
7700000000026590005
20áâà1,20áâà4,20áâà7,22,24,30áâà1
7700000000026590006
30áâà2,30áâà3,30áâà4,30áâà5,32áâà1
7700000000026590007
32áâà2,32áâà4,34ª1,34ª2,34ª3,34ª3áâà2
7700000000026590008
34ª4,34ª4áâà2,34,36,36áâà2,36áâà3
7700000000026590009
36áâà4,36áâà5,36áâà6,36áâà7,36áâà8
7700000000026590010
36áâà9
7700000000026590011
3,4/2áâà1,4/2áâà2,4/2áâà3,5áâà1,5áâà2
7700000000026600001
5,7,8/1áâà1,10_12áâà1,10_12áâà2,11,13
7700000000026600002
14áâà1,14áâà2,15,16áâà2,16áâà2
7700000000026600003
16áâà2,16áâà2,17,18,19,20,21,22,23
7700000000026600004
23áâà3,25,25áâà3,27,28,30áâà1,30áâà2
7700000000026600005
1áâà1,1áâà2
7700000000026620001
7700000000026620002
1áâà7,1áâà8,1áâà9,1áâà10,1áâà11,1áâà13
7700000000026620003
7700000000026620004
7700000000026620005
7700000000026620006
7700000000026620007
7700000000026620008
1áâà39,1áâà40,1áâà41,1áâà43,1áâà44
7700000000026620009
1áâà45,1áâà46,1áâà47,1áâà48,1áâà49
7700000000026620010
1áâà50,1áâà51,1áâà1,1áâà2,1áâà1
7700000000026620011
1áâà2,1áâà3,3áâà1,3áâà2,3áâà3,3áâà4
7700000000026620012
7700000000026620013
3áâà11,3áâà12,3áâà13,3áâà14
7700000000026620014
3,3,3áâà1,3áâà2,3áâà3,3áâà4
7700000000026620015
3áâà5,3áâà6,5áâà1,5áâà2,5áâà3,5áâà1
7700000000026620016
5áâà2,5áâà3,5,5áâà1,5áâà2,5áâà3
7700000000026620017
5áâà4,5áâà1,5áâà2,5áâà3,5áâà7
7700000000026620018
5áâà8,5áâà9,6,6áâà1,6áâà2,6áâà3
7700000000026620019
6áâà4,6áâà5,6áâà6,6áâà7,6áâà8,6áâà9
7700000000026620020
6áâà10,6áâà11,6áâà12,6áâà13,6áâà14
7700000000026620021
6áâà16,6áâà17,6áâà18,6áâà19,6áâà20
7700000000026620022
6áâà21,6áâà22,6áâà23,6áâà24,6áâà25
7700000000026620023
6áâà26,6áâà27,6áâà28,6áâà29,6áâà30
7700000000026620024
6áâà31,6áâà32,6áâà33,6áâà34,6áâà35
7700000000026620025
6áâà36,6áâà37,7áâà1,7áâà2,7áâà3,7áâà4
7700000000026620026
7áâà1,15áâà1,15áâà2,15,18áâà1,18áâà2
7700000000026620027
18áâà3,18áâà4,20áâà1,20áâà2,20áâà1
7700000000026620028
20áâà2,20áâà3,20áâà4,20áâà5
7700000000026620029
20áâà6,20áâà7,20áâà8,20áâà9
7700000000026620030
20áâà10,20áâà13,20áâà14,20áâà15
7700000000026620031
20áâà16,20áâà17,22,22áâà2,22áâà3
7700000000026620032
7700000000026620033
7700000000026620034
2,4,5ª1,6,6,7,7,8,8áâà1,8áâà2,9ª1,9
7700000000026630001
10,11,12,13,13,14,16,18,19,19áâà11,20
7700000000026630002
21,22ª1,22ª2,23,23áâà2,23áâà3,23áâà4
7700000000026630003
25áâà2,25áâà3,25áâà5,26ª1,26ª2,27
7700000000026630004
27áâà2,27áâà4,29,29áâà2,30,30áâà1
7700000000026630005
30áâà2,31áâà1,31áâà2,31áâà3,31áâà4
7700000000026630006
31áâà6,31áâà7,31áâà9,31áâà15,31áâà16
7700000000026630007
31áâà18,31_,31áâà1,31áâà2,32,32áâà2
7700000000026630008
32ª1,32ª2,32ª3,34,34áâà2,36
7700000000026630009
6áâà3
7700000000026670001
2/5áâà5,4áâà1,4áâà2,4áâà3,4áâà5
7700000000026680001
109074
1,1/3,2_,3,3áâà1,5ª1,5ª1áâà3,5ª2
7700000000026690001
5ª2áâà3,5ª3,5ª4,7áâà3,7ª1,7ª1áâà2,7ª2
7700000000026690002
7ª2áâà2,9ª1,9ª1áâà2,9ª1áâà3,9ª1áâà4
7700000000026690003
9ª3,9ª4,9ª5,9ª6,9ª6áâà1,9ª6áâà2
7700000000026690004
9ª6áâà3,11ª1,11ª2áâà2,11ª3,13áâà5
7700000000026690005
13áâà6,13áâà7,13ª1,13ª1áâà2,13ª2,15
7700000000026690006
3áâà1,5,5_7áâà2,7áâà2,8áâà1,9,11áâà1
7700000000026700001
12_14,13_15,16,16áâà1,17,17áâà1,17áâà2
7700000000026700002
18áâà1,20áâà1,20áâà1,21,21_23áâà1,22
7700000000026700003
27áâà1,29áâà1,31áâà1,37_39,41áâà1
7700000000026700004
41áâà2,41áâà5
7700000000026700005
1,3,4,5
7700000000026710001
2,2ª2,2,5/13
7700000000026740001
3,6,6áâà1,6áâà3,9/1áâà1,11áâà2,13áâà1
7700000000026750001
13/21
7700000000026750002
3,3áâà2,5,7,7áâà4
7700000000026760001
7700000000026760002
28,30,30áâà3,32áâà1
7700000000026770001
23/25,23/25áâà3,27áâà1,27áâà1,27áâà2
7700000000026770002
27áâà6,27áâà7
7700000000026770003
4/3,5áâà1,5áâà2,7,9áâà1,9áâà2,9áâà3,13
7700000000026780001
15,17,17áâà1,17áâà3,17,19áâà1,20áâà1
7700000000026780002
20áâà3,20áâà4,20áâà7,22/10,23,24,24
7700000000026780003
1/4
7700000000026790001
2/7,4áâà2,4áâà3
7700000000026800001
24áâà9,24áâà11,24áâà13,26/9áâà1,26/9áâà2
7700000000026810001
20,22/14,24áâà1,24áâà2,24áâà4,24áâà7
7700000000026810002
4,6_8,6_8áâà2,10,10áâà1
7700000000026810004
1áâà2,1áâà2,1/2,3_5áâà1,3_5áâà1
7700000000026810005
3_5áâà1,7,7áâà2,11,11áâà3,13áâà1
7700000000026810006
13áâà6,13áâà7,13áâà8,15,15áâà2,17áâà1
7700000000026810007
17áâà3,17áâà5,17áâà6,19áâà1,19áâà2
7700000000026810008
29,31,33,35áâà1,35áâà2,35áâà3,37,37
7700000000026820001
39,41,43,45,47,49,51áâà1,51áâà3,51áâà4
7700000000026820002
51áâà5,51ª1,51ª2,51ª3
7700000000026820003
40,42,46,46áâà2,46áâà5,48,50,50áâà2
7700000000026820004
50áâà3,50áâà4,50áâà1,50áâà2,50áâà3
7700000000026820005
52áâà4,52áâà6,53,53áâà2,53/27áâà2
7700000000026820006
54áâà1,54áâà2,55,57ª1,57ª2,59ª1
7700000000026820007
59ª1áâà2,59ª2,59ª2áâà2,61ª1,61ª2,61
7700000000026820008
63,63áâà2,63áâà1,63áâà2,63áâà3
7700000000026820009
63áâà4,63áâà5,63áâà6,63áâà7,63
7700000000026820010
63ª1,65,67ª1,67ª2,67ª3,67ª3áâà2
7700000000026820011
67ª3áâà3,69,71,71áâà2,73,75,75áâà2
7700000000026820012
20áâà2,22,22áâà2,22áâà3,22áâà4,22áâà5
7700000000026820013
22áâà6,22áâà7,24áâà1,24,24áâà1
7700000000026820014
24áâà4,24áâà5,24áâà6,24,24áâà1
7700000000026820015
24áâà2,24áâà3,24áâà4,24áâà5
7700000000026820016
24áâà6,24,26,26áâà2,26áâà3,26áâà4
7700000000026820017
26áâà5,26áâà6,26áâà7,26áâà8,28,28áâà2
7700000000026820018
28áâà3,28áâà4,28áâà6,28áâà7,28áâà9
7700000000026820019
28áâà10,28áâà13,32,32áâà1,32áâà2
7700000000026820020
32áâà1,32áâà2,32,34,34áâà2,34áâà3
7700000000026820021
34áâà4,34áâà5,34áâà6,34áâà7,34áâà8,34
7700000000026820022
2,3,4áâà1,4áâà2,5,6,7,9,10,10áâà2,10
7700000000026820023
11,12,12áâà1,14,14áâà2,14áâà3,15
7700000000026820024
15áâà2,15áâà4,17,19áâà6,19ª1,19ª2,19ª3
7700000000026820025
19ª4,19ª5,21áâà4,21ª1,21ª2,21ª3,23ª1
7700000000026820026
23ª2,25
7700000000026820027
1,1,3,4,5,6,7,8,9,9áâà1,10,10áâà1,11
7700000000026840001
11áâà1,11áâà2,12,12áâà2,13ª1,13ª2,13ª3
7700000000026840002
14ª1,14ª2,14ª3,16ª1,16ª2,16ª3,16ª4
7700000000026840003
16ª5,16áâà1,16áâà2,16áâà3,17ª1,17ª2
7700000000026840004
17ª2áâà1,17ª2áâà2,18,18áâà2,19,19áâà1
7700000000026840005
19ª1,19ª2,19ª3áâà1,20,20áâà2,21/1,22
7700000000026840006
22áâà2,22ª2,22ª3,22ª3áâà2,22ª3áâà5
7700000000026840007
22ª3áâà8,22ª3áâà9,22ª3áâà10,22ª3áâà11
7700000000026840008
23,23áâà1,24,24áâà1,24,25,26,26,26
7700000000026840009
26,27ª1,27ª1áâà1,27ª2,27ª2áâà2,27
7700000000026840010
27,27,27,27,28,28áâà1,28
7700000000026840011
7700000000026890001
9áâà20,9áâà21,9áâà22,9áâà23,9áâà24
7700000000026890002
9áâà25,80áâà1,80áâà2,80áâà4,80áâà5
7700000000026890003
80áâà8,80áâà9,80áâà10,80áâà11,80áâà12
7700000000026890004
80áâà14,80áâà21,80áâà22,80áâà23,80áâà25
7700000000026890005
3,5áâà1,5áâà2,5áâà4,5áâà6,7,7áâà2
7700000000026930001
7áâà3,7,9,9áâà2,9áâà3,13,13áâà2,15
7700000000026930002
17áâà1,17áâà2,17áâà3,17/52
7700000000026930003
2,2áâà1,2áâà5,2áâà68,2áâà113,4,4áâà1
7700000000026930004
4áâà2,4áâà3,6ª2,8,12áâà1,12áâà2,12áâà3
7700000000026930005
12áâà4,12áâà5,12áâà6,12áâà7,12ª1
7700000000026930006
4,6ª1,6ª1áâà2,8ª2,10,10áâà4,12,20,26
7700000000026950001
28,28áâà2,28áâà3,28ª2
7700000000026950002
3,4,4ª1,5,6,7,8,8áâà3,8ª1,8ª2,8ª2áâà1
7700000000027000001
8ª2áâà2,8ª2áâà3,11,13,13áâà1,13áâà2
7700000000027000002
15,15áâà13,15áâà17,15áâà18,15áâà19
7700000000027000003
15áâà20,15áâà21,15áâà22,15áâà23
7700000000027000004
15áâà24,15áâà24,15áâà25,15áâà26
7700000000027000005
15áâà27,15áâà28,15áâà29,15áâà30
7700000000027000006
15áâà31,15áâà43,15áâà51,15áâà53
7700000000027000007
15áâà57,15ª1,15ª2,15ª4,15ª5,15ª7,15ª8
7700000000027000008
15ª9,15ª10,15ª12,15ª14,15ª15,15ª16
7700000000027000009
15ª21,15ª25,15ª32,15áâà1,15áâà2
7700000000027000010
15áâà3,15áâà8,15áâà9,15áâà10
7700000000027000011
15áâà11,15áâà12,15áâà12,15áâà13
7700000000027000012
15áâà14,15áâà15,15áâà16,15áâà17
7700000000027000013
15áâà19,15áâà20,15áâà21,15áâà22
7700000000027000014
15áâà23,15áâà24,15áâà25,16ª1,16ª2
7700000000027000015
16ª4,16ª5,18ª1,18ª2,20,20áâà3,20ª1
7700000000027000016
20ª1áâà1,22,22áâà2,22áâà3,22áâà4
7700000000027000017
22áâà5,22áâà6,22,22áâà1,22áâà12
7700000000027000018
24ª1,24ª2,26,26áâà13,26áâà14,28,28áâà2
7700000000027000019
1,3,3áâà2,3,5,5,7áâà1,9,13,15,15,17
7700000000027010001
17,19,19áâà2,21
7700000000027010002
áâà1,áâà2,áâà5,áâà6,áâà7,áâà8,áâà9
7700000000027010003
áâà10,6,6áâà2,6,6áâà2,6,6áâà2
7700000000027010004
7700000000027010005
6áâà8,6áâà9,6,8áâà1,8áâà2,8áâà3
7700000000027010006
7700000000027010007
8áâà10,8áâà11,8áâà12,12,12áâà2,12áâà3
7700000000027010008
1,1áâà1,2,3,4,5,5áâà1,6,8,9,10,10ª1
7700000000027020001
11áâà1,11ª1,11ª2,12,13,14
7700000000027020002
2,4,4áâà1,8,8áâà1,15
7700000000027030001
1,1áâà3,2,2áâà2,2áâà4,3,3áâà1,3áâà1
7700000000027040001
7700000000027050001
7700000000027060001
1ª1,1,2,2áâà1,3,3áâà3
7700000000027060002
7,9,9
7700000000027070001
2áâà1,4áâà1,4,5ª4,6,6áâà2,6áâà3
7700000000027070002
3,10,14/18,16,16
7700000000027080001
1áâà1,1áâà2,1áâà3,1áâà4,1ª1,1/2áâà1,1
7700000000027090001
1áâà4,1áâà5,1,1áâà2,1áâà3,1áâà4
7700000000027090002
1áâà5,1áâà1,1áâà1,1áâà2,1áâà3
7700000000027090003
1áâà4,1áâà5,1áâà6,1áâà7,1áâà8
7700000000027090004
1áâà9,1áâà10,1áâà2,1áâà3,1áâà4
7700000000027090005
1áâà5,1áâà6,1áâà7,1áâà1,1áâà2
7700000000027090006
1áâà3,1áâà4,1áâà5,1áâà6,1áâà7
7700000000027090007
1áâà8,1áâà9,1áâà11,1áâà12,1áâà13
7700000000027090008
2,2,2áâà1,2áâà2,2áâà3,2áâà5
7700000000027090009
2áâà1,2áâà1,4,6ª1,6ª2,6ª2áâà1,8,17
7700000000027090010
22,22áâà2,24ª1,24ª2,24ª3,24,28,28áâà1
7700000000027090011
37áâà3,37áâà4,37áâà7,37áâà13,37/10áâà1
7700000000027090012
37/10áâà2,37/10áâà3,37/10áâà4
7700000000027090013
37/10áâà5,37/10áâà6,37/10áâà7
7700000000027090014
37/10áâà8,37/10áâà9,37áâà10,38,40,46
7700000000027090015
48,50ª2,50ª2áâà3,52
7700000000027090016
1,1áâà1,2,2áâà2,2áâà3,2áâà3,2áâà3
7700000000027180001
2áâà3,2áâà3,2áâà4,3,4,4áâà1,4áâà2,5
7700000000027180002
5áâà1,5ª1,5ª2,5ª2áâà1,6,6áâà1,6áâà2
7700000000027180003
6ª1,7,7áâà1,7ª1,7ª2,7ª3,7,7áâà1,8
7700000000027180004
8áâà1,8,9,9ª1,9ª2,9ª2áâà1,9ª2áâà2,10
7700000000027180005
10áâà1,10áâà2,11,11,11áâà2,11,12
7700000000027180006
12áâà1,12ª1,12,12áâà1,12,13,13áâà1
7700000000027180007
13ª1,13,13áâà1,14,14áâà1,14áâà2
7700000000027180008
14áâà3,14ª1,15,15,16,17/1,19,19áâà1
7700000000027180009
19ª1,19ª1áâà1,19ª2,19ª2áâà2,21,23,23ª1
7700000000027180010
23ª1áâà1,23ª2,24,24ª1,24ª1áâà1,25áâà1
7700000000027180011
25/2,26,26ª1,28,30,32,34
7700000000027180012
1,2,2áâà1,2áâà2,4,4ª1,4ª2,4ª3,4_,6
7700000000027190001
6áâà2,6,8,8áâà1,8áâà2,14,14áâà1
7700000000027190002
14áâà2,16,16áâà1,16ª1,16ª1áâà1,16ª2
7700000000027190003
16áâà1,16áâà2,18,18áâà2,18
7700000000027190004
3,3áâà2,3,5,5ª1,5ª1áâà1,5,6,7,8,10
7700000000027200001
10,12,12áâà2,12áâà3,12,14,16
7700000000027200002
1áâà3,1/2áâà1,1/2áâà2,3áâà1,3áâà2
7700000000027210001
3áâà8,5/2áâà1,5/2áâà3,5/2áâà4,7áâà1
7700000000027210002
7áâà2,7áâà3,7áâà5,7áâà6,9áâà1,9áâà1
7700000000027210003
3áâà3,15/18áâà4
7700000000027210004
9áâà2,11/6áâà1,13áâà2,13/3áâà1
7700000000027210005
13/3áâà5,15
7700000000027210006
6áâà1,12_14áâà25,12_14áâà27,14áâà2
7700000000027210007
14áâà3,14áâà5,14áâà6,14áâà7,14áâà1
7700000000027210008
14áâà2,14áâà3
7700000000027210009
2/6áâà1,4áâà4,6,8,12áâà1,12_14áâà1,14
7700000000027210010
1/4áâà3
7700000000027230001
1áâà1,2,2áâà1,4,4,6
7700000000027280001
3,3áâà2,8,8_10áâà1,11,11áâà2,11áâà3
7700000000027300001
7700000000027300002
11áâà11
7700000000027300003
9/1,9/1áâà2,10áâà3,10áâà10,10áâà12
7700000000027330001
10áâà14,14áâà1,14áâà2,14áâà3,14áâà4
7700000000027330002
14áâà5,14áâà7,16áâà1,16/15áâà1
7700000000027330003
16/15áâà2,16/15áâà3,16/15áâà4
7700000000027330004
16/15áâà5,16/15áâà6,16/15áâà7
7700000000027330005
16/15áâà10,16/15áâà11,16/15áâà15
7700000000027330006
16/15áâà17,16/15áâà18,16/15áâà20
7700000000027330007
16/15áâà22
7700000000027330008
5/7
7700000000027330009
1/2
7700000000027330010
1/7áâà1,1/7áâà1,1/7áâà5,1/7áâà10
7700000000027330011
1/7áâà16,1áâà1,1áâà2,1áâà3,1áâà4
7700000000027330012
1áâà6,1áâà7,1áâà8,1áâà9,1áâà11
7700000000027330013
1áâà12
7700000000027330014
24áâà1,24áâà2,24áâà3,26,26áâà2,26áâà2
7700000000027350001
26áâà3,26áâà3,26áâà4,26áâà5
7700000000027350002
7700000000027350003
7700000000027350004
3/5,4,6,8áâà1,8áâà2,9áâà2,12,15,16
7700000000027360001
17ª1,17ª2,18áâà1,19,19áâà2,20
7700000000027360002
3áâà1,3áâà6,4,5,6,7,8,9,12ª3,16
7700000000027370001
3/1áâà1,3/1áâà2,4,6áâà1,6áâà2,6áâà7
7700000000027390001
8áâà1,8áâà2,8áâà3,10áâà1,10áâà2
7700000000027390002
7/1áâà1,7/1áâà2
7700000000027390003
7700000000027420001
5áâà1,5áâà2,6,7,7áâà2,7áâà3,8,9áâà1
7700000000027440001
9áâà6,9áâà7,9áâà8,10,12/9,17
7700000000027440002
1/9,2/11,3,3,3,4,4,4,5/16,6/18
7700000000027450001
7/19,8/21,9,10,11,12,13/18,14,16,17,18
7700000000027450002
21,22,24,26
7700000000027450003
1,2,3,4áâà1,4áâà2,4áâà3,4,4áâà3,5
7700000000027520001
7700000000027520002
7700000000027520003
7700000000027520004
7700000000027520005
6áâà23,6áâà24,6áâà25,6áâà26,6áâà27
7700000000027520006
6áâà28,6áâà29,6áâà30,6áâà31,6áâà32
7700000000027520007
6áâà33,6áâà34,6áâà35,6áâà36,6áâà37
7700000000027520008
6áâà38,6áâà39,6áâà44,6áâà45,6áâà46
7700000000027520009
6áâà60,6áâà61,6áâà62,6áâà63,6áâà65,7
7700000000027520010
9ª1,9ª2,13,13áâà1,13áâà3,13áâà4,13áâà5
7700000000027520011
13áâà6,13áâà7,13áâà8,13áâà9,13
7700000000027520012
13áâà1,15,15ª1,15ª2,15ª2áâà1,17ª1
7700000000027520013
17ª2,19ª1,19ª2,21,23,23ª1,23ª1áâà1,25
7700000000027520014
25áâà1,25,27,27áâà2,29,31,33
7700000000027520015
6áâà40,6áâà41,6áâà42,6áâà43
7700000000027520016
1,2áâà2,4,4,8,8,8,10ª1,10ª2,10ª3
7700000000027550001
7700000000027550002
6/7áâà2
7700000000027570001
103070
6áâà1,10/4áâà1
7700000000027570002
2/14áâà1,4áâà1,8/5áâà1
7700000000027570003
103132
1,3,3áâà1,3áâà2,3áâà3,3áâà5,4,5,5áâà1
7700000000027580001
7700000000027580002
7700000000027580003
5áâà13,5áâà14,5áâà15,5áâà16,5áâà17
7700000000027580004
5áâà18,5áâà19,5áâà20,5áâà21,5áâà22
7700000000027580005
5áâà23,5áâà24,5áâà25,7,7áâà1,7áâà2,8,9
7700000000027580006
9áâà1,9áâà2,9áâà3,9áâà4,10,12,14ª1
7700000000027580007
14ª2,16,16áâà2,18,18áâà2,18áâà3,24áâà1
7700000000027580008
7700000000027580009
24áâà7,24áâà8
7700000000027580010
2áâà1,2áâà2,2áâà3,4áâà4,4áâà5,4,6áâà1
7700000000027590001
7,9,10,10áâà1,10áâà2,10áâà3,10áâà4
7700000000027590002
10áâà5,11,11áâà1,11áâà2,12,14áâà1,15ª1
7700000000027590003
15ª1áâà1,15ª1áâà2,15ª2,15ª3,17ª1,17ª2
7700000000027590004
17ª3,17,19ª1,19ª2,19ª3,19,21ª1,21ª2
7700000000027590005
21ª3,21,21áâà1,21áâà2,22,23ª1
7700000000027590006
23ª1áâà1,23ª1áâà2,23ª2,23ª3,23ª4
7700000000027590007
1,3,4,5áâà1,5áâà2,5áâà3,6,6áâà2,6,7,8
7700000000027600001
8ª1,9,10áâà1,10áâà2,10áâà3,10áâà4
7700000000027600002
10áâà5,10áâà6,10áâà10,10áâà12,10áâà13
7700000000027600003
10áâà14,10áâà15,10áâà16,10áâà17,11
7700000000027600004
11áâà1,11áâà2,12áâà1,12áâà2,12áâà3
7700000000027600005
7700000000027600006
12áâà10,12áâà11,12áâà12,12áâà13
7700000000027600007
7700000000027600008
12áâà20,13,15,17
7700000000027600009
7700000000027610001
9áâà7,9áâà8,9áâà9,9áâà10,9áâà11,9áâà12
7700000000027610002
9áâà13,9,10,10áâà1,10áâà2,10áâà3
7700000000027610003
10áâà5,10áâà7,10áâà8,10áâà10,10áâà11
7700000000027610004
10áâà13,10áâà20,10áâà23,10áâà25
7700000000027610005
10áâà33,10áâà34,10áâà35,10áâà36
7700000000027610006
7700000000027610007
10áâà41,10áâà42,11,12áâà1,12áâà2
7700000000027610008
12áâà3,12áâà4,12ª1,12ª1áâà1,12ª2,15ª1
7700000000027610009
15ª2,15ª2áâà1,15ª3,15ª4,15ª5,15ª6
7700000000027610010
15ª6áâà1
7700000000027610011
7700000000027620001
2áâà7,2áâà9,5
7700000000027630001
1ª1,1ª2,1,1áâà1,1,1,1áâà1,1áâà2
7700000000027680001
1,1áâà1,3ª1,3ª2,3ª3,3ª4,3,3áâà1,3
7700000000027680002
5,5áâà4,5áâà5,5áâà6,5áâà7,5áâà8,5áâà9
7700000000027680003
5áâà10,7áâà1
7700000000027680004
4,6,8,8ª1,10,12,14,16,18,20,22,22áâà1
7700000000027680005
22ª1
7700000000027680006
7700000000027700001
5áâà7,5áâà8,5áâà9,5áâà10,5áâà11,5áâà12
7700000000027700002
5áâà13,6,13áâà1,14,16/2áâà1,16/2áâà2
7700000000027700003
16/2áâà3,16/2áâà5
7700000000027700004
26,28áâà1,28áâà2,30,30áâà2,30áâà3,32
7700000000027710001
32áâà2,32áâà3,33,35áâà1,35áâà2,36áâà1
7700000000027710002
36áâà2,37,39,41áâà1,41áâà2,41áâà3,43,45
7700000000027710003
5/14,10,10/10áâà1,10/10áâà2,10,12,14
7700000000027710004
15,16áâà1,16áâà2,16áâà3,17áâà1,17áâà3
7700000000027710005
18,19,20,23áâà1,23áâà2,23áâà3,23áâà4
7700000000027710006
23áâà5
7700000000027710007
2áâà1,2áâà2,2áâà3,2áâà5,4áâà5,4áâà6,6
7700000000027710008
8/17
7700000000027710009
29,35,35áâà1,46,48,48áâà2,64
7700000000027740001
2/10,3,5,6,6ª1,6ª1áâà1,8,8áâà2,10,10
7700000000027750001
11,11áâà1,12,13ª1,13ª2,14,14áâà1
7700000000027750002
14áâà3,14áâà4,15,16,17,17áâà2,17áâà3
7700000000027750003
18,19,20,22,23
7700000000027750004
3,3áâà1,5,9áâà1,9áâà2,19/11áâà1
7700000000027760001
19/11áâà2,19/11áâà5,19/11áâà7,27/7áâà5
7700000000027760002
27/7áâà7,27_29ª42,29áâà4,31áâà1,31áâà2
7700000000027760003
31áâà3,31áâà3,31áâà3,31áâà4,31áâà5
7700000000027760004
7700000000027760005
31áâà11,33,35áâà2,35áâà6,35áâà7
7700000000027760006
4áâà1,6,8áâà4,8áâà6,14áâà1,14áâà2
7700000000027760007
14áâà3,18,22áâà1,22áâà2,22áâà3,24,26
7700000000027760008
26áâà2,34
7700000000027760009
7700000000027770001
1,2,3,4,5,6,7,9,10,11,13,14,15,17,18
7700000000027780001
19,20,21,22,23,25,26,27áâà1,27áâà2,28
7700000000027780002
29,30,31,32,33,34,35,36,38,39,40
7700000000027780003
41áâà1,41áâà2,41áâà3,43,43,45,46,48
7700000000027780004
49,50,51,52,53,54,55,56,57áâà2,58,59
7700000000027780005
60,61,62,63,64,65,66,67,68,69,70,71,72
7700000000027780006
73,74,75áâà1,75áâà2,76,77,78áâà1
7700000000027780007
78áâà2,79,80,81áâà1,81áâà2,81,82,83
7700000000027780008
84,84,84,85,85,85áâà1,85áâà2
7700000000027780009
85áâà3,85áâà4,85áâà5,85áâà6,86,87
7700000000027780010
87,91,92,93,94áâà1,94áâà2,96,96áâà2,97
7700000000027780011
1,2,3,4,5,9,11,16,18,22,25,26,27,28
7700000000027790001
28áâà1,29,30,31áâà1,33,34áâà1,36
7700000000027790002
37áâà1,37áâà3,40,41,105,107,110
7700000000027790003
111áâà1,116,124,133,136
7700000000027790004
1/5áâà1,3áâà1,3áâà2,3áâà3,3áâà4,3áâà15
7700000000027800001
4áâà1,4áâà2,4áâà3,5áâà1
7700000000027800002
8áâà3
7700000000027810001
1,1áâà2,1áâà4,1áâà5,1áâà6,1áâà7,1áâà9
7700000000027810002
1,2,2áâà1,2áâà3,2,4,4,6,6áâà2,6áâà5
7700000000027810003
6áâà6,7áâà1,7áâà2,7áâà3,7áâà4
7700000000027810004
7áâà5,7áâà6,7áâà7,7áâà8,7áâà14
7700000000027810005
7áâà15,7áâà16,7áâà17,7áâà18
7700000000027810006
7áâà19,7áâà22,7áâà23,7áâà25
7700000000027810007
7áâà28,7áâà29,7áâà30,7áâà30,8
7700000000027810008
8áâà2,8áâà4,9,10,10áâà1,10áâà2
7700000000027810009
10áâà17,10,10,10áâà1,11ª1,11ª2
7700000000027810010
11ª2áâà1,11ª2áâà2,11ª2áâà3,11áâà1
7700000000027810011
11áâà2,11áâà2,11áâà3,11áâà4
7700000000027810012
11áâà4,11áâà6,11áâà7,11áâà8
7700000000027810013
11áâà8,11áâà9,11áâà10,11áâà13
7700000000027810014
11áâà16,11áâà17,11áâà19,11áâà20
7700000000027810015
11áâà21,11áâà22,11áâà24,11áâà25
7700000000027810016
11áâà26,11áâà26,11áâà29,11áâà31
7700000000027810017
11áâà32,11áâà33,11áâà34,11ª1,12
7700000000027810018
12áâà2,12áâà3,12áâà4,12áâà5,12ª1
7700000000027810019
12ª1áâà1,12ª1áâà2,12ª3,12ª3áâà2,12ª4
7700000000027810020
12ª5,12ª6,12ª7,12,12ª1,12ª2,13áâà1
7700000000027810021
7700000000027810022
13áâà7,13áâà9,13áâà10,13áâà11,13áâà12
7700000000027810023
7700000000027810024
13áâà18,14áâà1
7700000000027810025
3,5,8,9,10,11,12,13,13,17,18,19,20,22
7700000000027830001
23,24,25,26,27,28,28áâà2,29,30,32,33,34
7700000000027830002
3áâà1,3áâà2,3áâà3,3áâà4,3áâà5,3áâà8
7700000000027840001
4/5áâà1,5/8áâà2,5/8áâà3,5/8áâà4
7700000000027840002
5/8áâà5,5/8áâà6,6/12áâà1,6/12áâà2
7700000000027840003
6/12áâà3,6/12áâà7,7/10áâà6,7/10áâà7
7700000000027840004
7/10áâà9,7/10áâà10,7/10áâà12,8áâà1
7700000000027840005
8áâà1,8áâà2,8áâà3,9,9áâà1,9áâà3,9áâà4
7700000000027840006
9áâà5,9áâà6,9áâà7,9áâà9,10áâà1,10áâà2
7700000000027840007
11/1áâà1,11/1áâà2
7700000000027840008
3,8,8áâà2,14,16/17,23,23áâà2,23áâà3
7700000000027850001
2,2áâà2,2,4,4,6
7700000000027860001
14ª,21,23,27ª,33ª
7700000000027870001
2,2,3,3áâà1,3áâà2,4,5,7,9,11,13,15,17
7700000000027880001
8,10,10áâà2,10ª2,10ª2áâà2,10ª3,12,14
7700000000027910001
14áâà2,14ª2,14ª3
7700000000027910002
2,3/27,4,4áâà2,5,5áâà2
7700000000027910003
1áâà1,2,2áâà1,3,4,4áâà1,5,5áâà2,6,7,8
7700000000027930001
8áâà1,8áâà2,9,10,10áâà1,10áâà2
7700000000027930002
4,6,7áâà1,7áâà2,10/2áâà1,11áâà2
7700000000027950001
2,3áâà10,3áâà11,3áâà23,3ª1,3ª2,3ª3,3ª4
7700000000027960001
3ª5,3ª6,3ª8,3ª9,3ª12,3ª13,3ª14,3ª15
7700000000027960002
3ª16,3ª17,3ª18,3ª19,3ª20,3ª34,5áâà1
7700000000027960003
5áâà2,7áâà1,7ª2,14,16áâà1,18
7700000000027960004
1/11,1/11áâà2
7700000000027960005
1áâà1,1áâà2,1áâà3,2áâà1,4áâà1,6áâà1
7700000000028000001
7ª2,7ª3,9,9ª2,9ª2áâà1,10áâà1,10ª1áâà1
7700000000028000002
10ª2áâà1,11áâà1,11áâà2,12áâà1,12ª1,13
7700000000028000003
13ª1,13ª2,13ª2áâà2,14ª1,15,16ª1,17
7700000000028000004
28,28áâà2,28áâà3
7700000000028010001
2áâà1,2áâà2,2áâà3,3áâà1,3áâà2,3áâà3
7700000000028020001
3áâà4,3áâà5,3áâà6,3áâà7,5,5áâà1,5áâà2
7700000000028020002
6,7,8,8áâà2,9áâà2,9ª1,9ª1áâà1,9ª2,9
7700000000028020003
10,10áâà1,10áâà2,11,13,14ª1,14ª1áâà1
7700000000028020004
14ª2,15,16,18,18áâà2,23áâà1,23áâà2
7700000000028020005
23áâà3,23áâà4,23áâà5
7700000000028020006
3,5,14,16
7700000000028030001
7,7áâà2,7,10
7700000000028040001
7700000000028050001
4,4ª1,4,5,7,11,13
7700000000028060001
4,5,5áâà2,5áâà3,5áâà5,5áâà6,5/8áâà4,7
7700000000028070001
7,8,8áâà3,9,9,9áâà2,10,11,11,11
7700000000028070002
12,13,13,14,15,17,18,19,19,21,21
7700000000028070003
22áâà1,22áâà2,22,23,23,24,25,25
7700000000028070004
25áâà2,26/9,27,29áâà1,29,30áâà1
7700000000028070005
30áâà1,30áâà2,30áâà3,30áâà4,30áâà5
7700000000028070006
30áâà6,30áâà7,30áâà8,30áâà10,30áâà11
7700000000028070007
30áâà12,30áâà13,30áâà15,30áâà16
7700000000028070008
30áâà17,30áâà19,30áâà20
7700000000028070009
9,10,11,14áâà1,14áâà2,16_18áâà1
7700000000028080001
16_18áâà3,17/21,21,21áâà2,23/19,28áâà1
7700000000028080002
28áâà2,28áâà2,29áâà1,29áâà2,29áâà3
7700000000028080003
29áâà4,29ª1,29ª2,31/1,36,38
7700000000028080004
33,33áâà2,33/35,35
7700000000028080005
1,1ª2,2ª1,2ª2,3ª1,3ª2,4,4áâà1,4ª1,4ª2
7700000000028090001
5,7ª1,7ª1áâà2,7ª1áâà5,7ª2,7ª2áâà3,7ª3
7700000000028090002
7ª4,9,10ª3,12,13ª3,14áâà2,14áâà3,14ª1
7700000000028090003
14ª2,14ª2áâà2,14ª3,14ª4,14ª5,14ª6,14ª7
7700000000028090004
15,17áâà4,17ª1,17ª1áâà2,17ª1áâà3
7700000000028090005
17ª1áâà4,17ª2,17ª3,17ª3áâà2,21,21áâà1
7700000000028090006
21áâà2,21áâà3,21áâà4,22,23,26áâà1
7700000000028090007
26áâà3,26ª1,26ª2,26ª2áâà2,26ª3
7700000000028090008
26ª3áâà2,26ª4,26ª4áâà1,30
7700000000028090009
4áâà1,4áâà2,4áâà3,4ª1,4ª2,4ª3,4ª4,4ª5
7700000000028100001
4ª6,4ª7,4áâà1,6ª1,6ª2,6ª3,6ª4,6ª5,6ª6
7700000000028100002
6ª7,8ª1,8ª2
7700000000028100003
3,3,3,5ª1,5ª2,5ª3,5ª4,5ª5,7ª1
7700000000028100004
7ª1áâà2,7ª2,7ª3,7,9,9áâà1,9áâà4
7700000000028100005
9áâà11,11ª1,11ª1áâà1,11ª2,11ª3,11áâà1
7700000000028100006
13ª1,13ª2,13ª3,13ª4,13ª5,15,17ª1,17ª2
7700000000028100007
17ª2áâà2,17,17
7700000000028100008
9,9áâà1,9áâà2,9áâà3,9áâà4,9áâà5,9áâà6
7700000000028110001
7700000000028110002
9áâà13,9áâà14,9áâà15,9áâà17,9áâà18
7700000000028110003
9áâà19,9áâà21,9áâà22,9áâà23,9áâà24
7700000000028110005
9áâà25,9áâà26,9áâà28,9áâà30,9áâà31
7700000000028110006
9áâà32,9áâà33,9áâà34,9áâà37,9áâà38
7700000000028110007
9áâà39,9áâà43,9áâà44,9áâà45,9áâà46
7700000000028110008
9áâà47,9áâà48,9áâà49,9áâà50,9áâà51
7700000000028110011
9áâà52,9áâà53,9áâà54
7700000000028110012
7,7ª1,7ª2,7ª3,7ª4,7ª5,7ª6,7ª7
7700000000028110013
7ª8,7ª9,7ª9,7ª10,7ª11,7ª11
7700000000028110014
7ª12,7ª13,7ª14,7ª15,7ª17,7ª18
7700000000028110015
7ª19,7ª20,7ª25,7ª27,7ª28,7ª30
7700000000028110016
7ª33,7ª35,7ª36,7ª37,7ª38,7ª39
7700000000028110004
7ª39áâà1,7ª39áâà3,7ª39áâà4,7ª43
7700000000028110017
7ª45,7ª45,7ª46,7ª49
7700000000028110018
7ª2,7ª2áâà1,9áâà16,9áâà29,9áâà42
7700000000028110010
1,1áâà1,1áâà2,1áâà4,1áâà5,2áâà1,2áâà2
7700000000028110019
2áâà3,2áâà4,3áâà3,3áâà1,3,4ª1
7700000000028110020
7700000000028110021
4ª1áâà5,4ª1áâà6,4ª1áâà7,4ª1áâà8
7700000000028110022
4ª1áâà9,4ª1áâà10,4ª1áâà11,4ª1áâà12
7700000000028110023
4ª1áâà13,4,4áâà1,4áâà2,5áâà1,5áâà2
7700000000028110024
7700000000028110025
5áâà19,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000028110026
7700000000028110027
7700000000028110028
6áâà17,6áâà18,6áâà19,6áâà20,6áâà21
7700000000028110029
6áâà22,6áâà23,6ª1,6,6áâà1,6áâà2
7700000000028110030
6áâà3,6áâà4,7,7áâà2,7áâà3,7áâà4
7700000000028110031
7áâà5,7áâà6,7áâà7,10,10áâà2,10áâà3
7700000000028110032
10ª1áâà1,10ª1áâà2,10ª1áâà3,10ª1áâà4,12
7700000000028110033
12áâà1,12áâà2,12áâà7,12áâà8,12áâà12
7700000000028110034
14ª1,14ª1áâà1,14ª1áâà2,14ª1áâà3
7700000000028110035
14ª1áâà4,14ª1áâà5,14ª1áâà6,14áâà1
7700000000028110036
7700000000028110037
7700000000028110038
14áâà10,14áâà11,16,16áâà1,16áâà2
7700000000028110039
16áâà3,16áâà11,16áâà12,16áâà13,16áâà18
7700000000028110040
7700000000028110041
9ª1áâà1
7700000000028110009
2,4,5,6,6áâà2,8,10,10,12ª1,12ª2,17/1
7700000000028120001
19/2,21
7700000000028120002
1,1áâà2,1áâà3,3,3áâà1,5,7ª1,7ª2,7ª3
7700000000028130001
7ª3,7ª4,7ª5,7ª6,7ª8,7ª9,7ª10,7ª11
7700000000028130002
7ª12,7ª14,7ª15,7ª16,7ª17,7ª18,7ª21
7700000000028130003
7ª37,9,9áâà1,11,13,13áâà1,13,13áâà1
7700000000028130004
2,4áâà1,6,6áâà2,10áâà1,10áâà6,10áâà8
7700000000028130005
7700000000028130006
14ª1,14ª2,14/1,15,16,17,17áâà2,18áâà8
7700000000028130007
18áâà10,18áâà27,18áâà29,18áâà32,18ª1
7700000000028130008
18ª2,18ª3,18ª4,18ª5,18ª5,18ª6,18ª7
7700000000028130009
18ª9,18ª12,18ª13,18ª14,18ª16,18ª19
7700000000028130010
18ª28,18ª31,19áâà4,19ª1,19ª1áâà1,19ª2
7700000000028130011
19ª2áâà5,19,20,20áâà4,20áâà5,20áâà7
7700000000028130012
20áâà8,20áâà9,20áâà10,20áâà12,20áâà14
7700000000028130013
20áâà15,20ª1,20,21áâà3,21ª1,21ª2,22
7700000000028130014
23/16,25áâà1,25áâà2,25áâà6,27,27áâà1
7700000000028130015
7700000000028150001
7700000000028160001
114054
4áâà1,10,11,13áâà1,13áâà2,15áâà1
7700000000028160002
22/25áâà1,23,23áâà2,23áâà3,23áâà4
7700000000028160003
23áâà10,23áâà1,23áâà2,23áâà3
7700000000028160004
24áâà2,25,25áâà9,25áâà11
7700000000028160005
7700000000028170001
7700000000028180001
9,11,11áâà2,12,12,13,14,14áâà2,14áâà3
7700000000028190001
15,16,16áâà2,17,18,18áâà2,19áâà5,19ª1
7700000000028190002
19ª2,19ª3,19ª4,20,20áâà1,20áâà2,20áâà3
7700000000028190003
20ª1,22áâà6,22ª1,22ª2,22ª3,22,22
7700000000028190004
21,23,24,24áâà2,25,26,27,28ª1,28ª2
7700000000028190005
28ª3,29,30ª1,30ª2,31,31áâà2,32,32áâà2
7700000000028190006
33áâà9,33áâà10,33áâà12,33áâà13,33áâà14
7700000000028190007
33ª1,33ª2,33ª3,33ª4,33ª5,33ª6,33ª7
7700000000028190008
33ª8,33,34,35,35áâà3,36,37,38,39,40
7700000000028190009
42,42áâà6,42áâà14,42,44/28
7700000000028190010
11,13,13áâà1,15,17,17áâà2,17,18,19
7700000000028200001
19áâà1,20,22,22áâà1,22ª2,24,26,26ª2
7700000000028200002
26ª3,28,30,32ª1,32ª2,32,34ª1,36,38ª1
7700000000028200003
38ª1áâà1,38ª2
7700000000028200004
1ª1,2ª1,2ª1áâà1,2ª1áâà2,2ª9,3,4ª1,4ª2
7700000000028200005
4ª2áâà1,4ª4,4ª4áâà2,4ª5,4ª6,4ª6áâà1,4
7700000000028200006
5,6ª1áâà2,6ª2,6ª3,7,7áâà1,7áâà2,7,7
7700000000028200007
8,9,10,10áâà1,10,10,12,12áâà2,14
7700000000028200008
7700000000028200009
2/1ª1,2/1ª1áâà3,2/1ª2,2/1ª3,2/1ª4,2
7700000000028220001
2,3,5,6,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000028220002
6áâà6,6áâà7,6áâà8,6áâà10,6áâà14,6áâà16
7700000000028220003
7,7áâà2,8,8áâà3,8áâà4,8áâà8,8áâà11
7700000000028220004
8áâà1,9áâà3,9áâà4,9áâà5,9áâà7,10,10
7700000000028220005
12,18,19áâà1,19áâà2,19áâà3,19áâà4
7700000000028220006
19áâà5,19áâà6,19,20,25,25áâà1,25áâà2
7700000000028220007
25áâà3,27,27áâà1,29áâà1,29áâà2,29áâà5
7700000000028220008
7700000000028220009
29áâà12,29áâà12,33,35
7700000000028220010
22,22áâà1,22áâà2,24,24áâà2,51
7700000000028220011
18áâà3,18ª1,18ª2,18ª2áâà2,18ª5,20/2ª1
7700000000028250001
20/2ª2,22/1,24,26ª1,26ª2,27ª1,27ª2
7700000000028250002
27ª3,28,28áâà3,28ª1,28ª1áâà3,29,29áâà6
7700000000028250003
30ª1,30ª2,30ª3,30ª3áâà2,31ª1,31ª2,31ª3
7700000000028250004
31ª4,31ª4áâà2,32,32ª1,32ª1áâà2
7700000000028250005
32ª1áâà3,32ª2,32ª3,32ª3áâà2,32,33
7700000000028250006
34ª1,34ª1áâà2,34ª1áâà3,34ª1áâà6
7700000000028250007
34ª1áâà8,34ª2,35/12,36,37/11,38ª1,38ª2
7700000000028250008
38ª2áâà2,39,39,40,41,42,42áâà2,42áâà3
7700000000028250009
42,43ª1,43ª2,43,44áâà1,44áâà2,44áâà3
7700000000028250010
44áâà4,44áâà5,45,45áâà2,46áâà1,46áâà2
7700000000028250011
46áâà3,46ª2,47,48,48áâà2,48áâà3,49ª1
7700000000028250012
49ª2,49ª3,49ª3áâà2,51,53,55,57,59
7700000000028250013
1,1ª2,1ª2áâà2,1,2,3ª1,3ª2,3ª2áâà2,3
7700000000028250014
4,5,5áâà2,6,7ª1,7ª1áâà2,7ª2,8ª1
7700000000028250015
8ª1áâà2,8ª2,9,9áâà2,10ª1,10ª2,11ª1
7700000000028250016
11ª2,12,13,14/16,15,15áâà2,15áâà3,17
7700000000028250017
17áâà2,19/14,21/11,21,23ª1,23ª1áâà2
7700000000028250018
23ª1áâà3,23ª2,23ª2áâà2,25ª1,25ª2
7700000000028250019
25ª2áâà2
7700000000028250020
2/12,4,5,6ª1,6ª1áâà2,6ª2,6ª3,6ª4,6ª5
7700000000028270001
6,8ª1,8ª2,8ª3,8ª3áâà2,8,12ª2,12ª3
7700000000028270002
12/17
7700000000028270003
áâà1,2áâà2,2ª1,2ª1áâà4,2ª3,2ª3áâà2,2ª4
7700000000028280001
2ª5áâà2,2ª6,2,2,3,3áâà1,3ª1,3ª2,4ª1
7700000000028280002
4ª3,4ª4,4ª4áâà3,4,4,5ª1,5ª2,5ª3,5ª4
7700000000028280003
5,5,6ª1,6ª2,6,6,7ª1,7ª1áâà2
7700000000028280005
7ª2áâà1,7,8ª1,8ª1áâà2,8ª2,8ª3,8ª3áâà1
7700000000028280006
8ª3áâà2,8ª3áâà4,9,9áâà5,9,9,10,12ª1
7700000000028280007
12ª2,12ª2áâà3,12ª2áâà4,12ª3,12ª3áâà2
7700000000028280008
12ª4,12ª5,12ª6,12,12,13ª1,13ª2,15ª1
7700000000028280009
15ª2,15ª2áâà3,17ª1,17ª2,19,19,20,21ª1
7700000000028280010
21ª2,21ª3,21ª4,21,26
7700000000028280011
23ª1,23ª1áâà3,23ª1áâà4,23ª2,23,23
7700000000028280012
25ª1,25ª2,27,29,29áâà5,29áâà6,31ª1,31ª2
7700000000028280013
2ª5
7700000000028280004
3,4,5,6,6áâà2,7,8/2,9/1,10,11/2,12,13
7700000000028290001
14/2,15,18,20,21,21,21,22/2,23,23
7700000000028290002
23,24,25,27,29,29áâà2
7700000000028290003
3,3áâà3,3_5áâà13,4áâà3,4áâà4,4áâà5
7700000000028300001
4áâà6,4áâà11,4áâà12,4áâà15,4áâà1
7700000000028300002
5áâà1,5áâà2,5áâà3,5áâà3,5áâà4,5áâà5
7700000000028300003
7700000000028300004
5áâà13,5áâà15,5áâà16,5áâà17,5áâà18
7700000000028300005
5áâà23,5áâà25,5áâà26,5áâà1,5áâà2
7700000000028300006
5áâà3,5áâà4,6áâà3,6áâà4,7áâà7,7áâà8
7700000000028300007
9áâà4,9áâà4,9áâà5,9áâà6
7700000000028300008
2/24
7700000000028340001
1,3,4,5áâà1,5áâà2,5áâà3,6,7áâà1,7áâà2
7700000000028340002
10áâà1,11,11áâà1,11áâà2,11áâà7,11áâà8
7700000000028340003
11áâà11,11áâà17,11áâà21,13áâà1,13áâà2
7700000000028340004
14,15áâà1,15áâà2,16,17áâà2,17áâà3
7700000000028340005
17áâà4,18,19áâà1,19áâà2,20áâà1,21áâà1
7700000000028340006
21áâà4,21áâà6,21áâà7,21áâà9,22,23áâà1
7700000000028340007
23áâà2,24,25áâà1,25áâà2,26
7700000000028340008
3áâà1,3áâà2,4áâà1,4áâà2,6,7,9áâà1
7700000000028350001
10áâà1,10áâà2
7700000000028350002
6,9,9,11,11,13,15,15áâà2
7700000000028360001
1,1áâà1,1áâà2,1,1áâà2,2áâà1,2áâà2
7700000000028360002
2áâà3,2,3,3,5,5,5áâà1,5áâà3,7,7
7700000000028360003
4,5,6,6ª1,7,7áâà1,7áâà2,7áâà3,7ª1,8,9
7700000000028400001
9ª1,10,11,11áâà2,12,13,15,17,18,19/13
7700000000028400002
22,23,25,25áâà1,26,26áâà1,28,30,31
7700000000028400003
32,33áâà2,33ª1,33ª2,34ª1áâà1,35,35ª1
7700000000028400004
36/11,36/11áâà1,37,42,44,44/17,46/14
7700000000028400005
46/14áâà2,48,50,50ª1,52ª1,52ª3,54
7700000000028400006
7700000000028410001
1,1áâà2,1áâà3,1áâà4,3,3áâà1,3áâà2
7700000000028420001
3áâà3,3áâà4,4,6áâà1,6áâà2,6áâà3,16
7700000000028420002
7700000000028420003
16áâà7,20,20áâà1,20áâà2,20áâà3,20ª1
7700000000028420004
3áâà1,3áâà2,5áâà2,5áâà4,5ª2,5,6,8áâà1
7700000000028430001
10áâà1,10áâà2,10áâà3,10áâà5
7700000000028430002
7700000000028440001
7áâà7,7áâà8,7áâà9,7áâà10,7áâà11,7áâà1
7700000000028440002
7700000000028440003
2,2áâà2,2áâà3
7700000000028440004
1/4áâà1,1/4áâà2,1/4áâà3,1/4áâà4
7700000000028450001
1/4áâà5,1/4áâà6,1/4áâà7,1/4áâà8
7700000000028450002
1/4áâà10,1/4áâà11,1/4áâà20,1/4áâà25
7700000000028450003
1/4áâà27,1/4áâà34,2/3áâà1,2/3áâà2
7700000000028450004
5áâà3,5áâà3,5áâà4,5/7áâà19,5/7áâà22
7700000000028450005
5/7áâà23,5/7áâà24,5/7áâà25,5/7áâà27
7700000000028450006
7700000000028450007
7700000000028450008
11áâà56,11áâà65,11ª1,11ª2,11ª5,11ª18
7700000000028450009
11ª27,11ª53,11ª54,11ª55,11ª58
7700000000028450010
4áâà1,4áâà2,4áâà3,7áâà3,8,8áâà3,10,10
7700000000028470001
1áâà2,3/9áâà1,3/9áâà6
7700000000028480001
1,3/9áâà2
7700000000028480002
1áâà1,1áâà1,1áâà2,1áâà3,1/8áâà6
7700000000028490001
1/8áâà7,1/8áâà8,1/8áâà9,1/8áâà10
7700000000028490002
1/8áâà12,1/8áâà14,1/8áâà17,1/8áâà19
7700000000028490003
1/8áâà21,1/8áâà22,3/5áâà3,3/5áâà4
7700000000028490004
3/5áâà4,3/5áâà5
7700000000028490005
2áâà2,4áâà1,4áâà2,4áâà3,4áâà8,4áâà9
7700000000028500001
4áâà10,4áâà11,4áâà12,6ª1,7/14,8áâà5
7700000000028500002
8áâà6,8ª1,8ª2,8ª3
7700000000028500003
3áâà1,3áâà5,5áâà2,5/10áâà1,5/10áâà3
7700000000028510001
5/10áâà4,5/10áâà5,5/10áâà6
7700000000028510002
7700000000028510003
1áâà4,3,3áâà7,6
7700000000028520001
12/4áâà5
7700000000028530001
86/1áâà1,88áâà1,88áâà2
7700000000028530002
1áâà1,1/2áâà1,1/2áâà2,1/2áâà9,2,2áâà2
7700000000028540001
7700000000028540002
2áâà9,3,5áâà1,5áâà2,5áâà11,7,9,9áâà5
7700000000028540003
13áâà2,13áâà3,13áâà8,15áâà1,15áâà2
7700000000028540004
15áâà1,15áâà2,15áâà4,15áâà5,17_23
7700000000028540005
20/4áâà1,22,24áâà1,24áâà4,24áâà5,25
7700000000028540006
25_27,26áâà1,26áâà2,27,27áâà2,29
7700000000028540007
29áâà1,30/2,30/2áâà3,31/22,31/22áâà2
7700000000028540008
31/22áâà3,32/1áâà1,32/1áâà7,32/1áâà8
7700000000028540009
32/1áâà9,32/1áâà17,34áâà1,34áâà2
7700000000028540010
34áâà3,34áâà4,34,36áâà1,36áâà3,36ª2
7700000000028540011
38áâà1,38áâà2,39áâà1,40áâà1,40áâà2
7700000000028540012
40áâà4,40áâà4,40_42,40_42áâà3
7700000000028540013
40_42áâà6,40_42áâà7,40_42áâà8
7700000000028540014
40_42áâà9,43áâà3,44,44áâà2,44áâà3
7700000000028540015
7700000000028540016
58áâà6,58áâà7,58áâà8
7700000000028540017
7700000000028550001
3áâà1,7,11áâà2
7700000000028560001
1,1áâà1,2,8áâà1
7700000000028570001
1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà6,2
7700000000028580001
3,3,4,4áâà1,4áâà2,5,5áâà2,5áâà3,5ª1,6
7700000000028580002
6áâà2,6ª1,6,8ª1,8ª2
7700000000028580003
3,4,4áâà2,4áâà3,4áâà4,5,5áâà1,6,7
7700000000028590001
7áâà3,7ª3,7ª4,7,7,8,9áâà1,9áâà2
7700000000028590002
9áâà3,9áâà4,9áâà5,9áâà6,9áâà7,9áâà7
7700000000028590003
9áâà18,9áâà19,9áâà20,9áâà24,9áâà25
7700000000028590004
9áâà26,9,11,11ª1,11ª1áâà1,12,12áâà1
7700000000028590005
12áâà2,12ª2,13,13ª2,13ª2áâà1,14,15ª1
7700000000028590006
15ª1áâà1,15ª1áâà2,15ª2,15ª3,16ª1,16ª2
7700000000028590007
7700000000028590008
31,31áâà1,31áâà2,31/2áâà2,31/2
7700000000028600001
7700000000028600002
7700000000028600003
41áâà11,41áâà12,41áâà13,41áâà14
7700000000028600004
41áâà15,41áâà16,41áâà19,41áâà20
7700000000028600005
41áâà21,41áâà22,41áâà23,41áâà24
7700000000028600006
41áâà25,41áâà26,41áâà27,41áâà28
7700000000028600007
41áâà29,41áâà30,41áâà31,41áâà32
7700000000028600008
41áâà33,41áâà34,41áâà35,41áâà36
7700000000028600009
41áâà37,41áâà38,41áâà39,41áâà40
7700000000028600010
41áâà41,41áâà42,41áâà43,41áâà43
7700000000028600011
41áâà44,41áâà45,41áâà47,41áâà48
7700000000028600012
41áâà49,41áâà50,41áâà51,41áâà56
7700000000028600013
41áâà57,41áâà59,41áâà61,41áâà62
7700000000028600014
41áâà63,41áâà64,41áâà65,41áâà66
7700000000028600015
41áâà67,41áâà68
7700000000028600016
1áâà4,1áâà5,1ª1,1ª2,1ª3,2áâà5,2/1áâà7
7700000000028600017
2/1áâà8,2/1áâà13,2/1áâà31,2/1ª1,2/1ª4
7700000000028600018
2/1ª5,2/1ª6,3,3áâà2,3áâà3,5,6áâà1,6áâà2
7700000000028600019
8,8áâà2,8áâà3,12áâà7,16,18,20áâà1
7700000000028600020
20áâà1,24áâà1,24áâà2,24áâà3,24áâà4
7700000000028600021
24áâà5,26,26áâà2,26áâà3,26áâà4,26áâà5
7700000000028600022
26áâà6,26áâà1,26áâà2,26áâà3,26áâà4
7700000000028600023
7700000000028600024
28áâà6,33áâà1,33áâà2,33áâà3,33áâà4
7700000000028600025
7700000000028600026
33áâà12,33áâà13,33áâà16,33áâà18
7700000000028600027
33áâà19,33áâà20,33áâà28,33áâà38,35,37
7700000000028600028
2,3,4,5,6,7,8,9,10,11,12,13,14,15,16
7700000000028610001
17,18,19,20
7700000000028610002
2,2áâà1,2áâà2,2áâà4,2áâà5,2,2áâà1,2
7700000000028630001
7700000000028630002
2áâà6,2,2áâà1,2áâà2,2áâà3,2áâà4
7700000000028630003
2,2áâà2,2,4,4áâà14,4áâà15,4áâà16
7700000000028630004
4áâà17,6,6áâà4,6áâà6,11ª1,11ª2
7700000000028630005
11ª2áâà1,11ª3,13,13áâà1,13,15,17ª1
7700000000028630006
17ª2,17ª2áâà1,17ª2áâà2,17ª2áâà3
7700000000028630007
17ª2áâà4,17ª3
7700000000028630008
1,3,5,5áâà2,5áâà4,5ª1áâà3,7,7áâà1
7700000000028630009
2,2áâà1,3áâà2,3ª1,3ª1áâà2,3ª2,5ª2,5ª3
7700000000028640001
5ª4,6,7,7áâà1,7áâà3,8,8ª2áâà3,8ª2áâà4
7700000000028640002
9,9ª2,9ª2áâà2,9ª3,9ª4,9ª4áâà1,10
7700000000028640003
11áâà4,11ª1,11ª2,12,12áâà1,12ª4,12ª5
7700000000028640004
13ª1,13ª2,13ª2áâà1,13ª3,13ª4,14,16áâà2
7700000000028640005
16ª1,16ª4,17ª1,17ª2,17ª2áâà2,17ª3,17ª4
7700000000028640006
18,18áâà2,19ª1,19ª1áâà1,19ª2,20áâà2
7700000000028640007
20ª1,20ª2,20ª3,20ª4,22,24,24áâà2,24ª4
7700000000028640008
24ª5,26,26áâà1,30,30áâà2,32ª1,32ª1áâà2
7700000000028640009
32ª2,32ª2áâà1,32ª3,32ª3áâà1,32ª4
7700000000028640010
áâà1,áâà2,1,1áâà1,1áâà2,1áâà3,1áâà4
7700000000028650001
1áâà5,1ª1,1ª1áâà3,1ª1áâà4,1ª1áâà5
7700000000028650002
1ª1áâà6,1ª1áâà7,1ª1áâà10,1ª1áâà11
7700000000028650003
1ª1áâà12,1ª1áâà13,1ª1áâà14,1ª1áâà15
7700000000028650004
1ª1áâà16,1ª1áâà17,1ª1áâà18,1ª1áâà19
7700000000028650005
1ª1áâà20,1ª1áâà21,1ª1áâà22,1ª3,1ª3áâà1
7700000000028650006
1ª3áâà3,1ª3áâà5,1ª3áâà6,1ª3áâà7
7700000000028650007
1ª3áâà8,1ª3áâà9,1ª3áâà10,1ª3áâà11
7700000000028650008
1ª3áâà12,1ª3áâà13,1ª3áâà15,1ª3áâà17
7700000000028650009
1ª3áâà18,1ª3áâà19,1ª3áâà20,1ª5,1ª5áâà1
7700000000028650010
1ª5áâà2,1ª5áâà3,1ª5áâà5,2,2áâà1,2áâà2
7700000000028650011
2áâà3,2ª1,2ª2áâà1,2ª2áâà2,2ª4,2ª5
7700000000028650012
2ª5áâà1,2ª5áâà2,2ª5áâà3,2ª5áâà4
7700000000028650013
2ª7áâà1,2ª7áâà2,2ª7áâà3,2ª7áâà4
7700000000028650014
2ª7áâà6,2ª7áâà7,2ª7áâà8,2ª7áâà9,2ª26
7700000000028650015
2áâà1,4,4ª1,5ª2,7,7ª1,7ª1áâà2,7ª2,7ª3
7700000000028650016
7ª3áâà1,7ª4,7ª5,7ª6,7ª7,7ª7áâà1,7ª12,9
7700000000028650017
10áâà1,10áâà6,11,12,13,14,15,15ª2
7700000000028650018
15ª2áâà1,15ª2áâà2,15ª2áâà4,16,17
7700000000028650019
18áâà1,19,22,24,26áâà1,26áâà1,28áâà1
7700000000028650020
7700000000028650021
31áâà1,32ª1,33,34,35ª1,35ª2,36
7700000000028650022
36áâà1,36áâà2,36áâà3,36áâà4,36ª1,36ª2
7700000000028650023
36ª3,36ª4,36ª5,36ª6,36ª7,36ª8,36ª9
7700000000028650024
36ª10,36ª11,36ª12,36ª14,36ª15,36ª16
7700000000028650025
36ª17,36ª18,36ª19,38,38áâà1,38áâà2
7700000000028650026
38áâà3,39,39áâà2,40ª1,41,41áâà1,43
7700000000028650027
43áâà2,43áâà3,43áâà4,44áâà4,45,45áâà2
7700000000028650028
7700000000028650029
45áâà8,45áâà9,45áâà10,45áâà11,45áâà12
7700000000028650030
45áâà13,45áâà14,45áâà15,46áâà1,49áâà1
7700000000028650031
55áâà1,55ª1,55ª1áâà1,55ª1áâà2,55ª5
7700000000028650032
55ª5áâà7,55,61áâà1,63,63ª1,65,65
7700000000028650033
67áâà1,67áâà1,69áâà1,71,71áâà1,75
7700000000028650034
75ª1,75ª2,75ª3,77áâà3,77ª1,77ª2,79
7700000000028650035
79áâà1,79áâà2,81áâà1,83áâà1,85áâà1
7700000000028650036
85áâà2,87,89áâà1,89áâà2,89áâà3,89ª1
7700000000028650037
89ª2,89ª3,89ª4,89ª5,89ª5áâà1,89ª5áâà2
7700000000028650038
91áâà22,91áâà23,91áâà24,91áâà25
7700000000028650039
91áâà1,93áâà1,93áâà2,93áâà3,95áâà1
7700000000028650040
95áâà2,95áâà3,95áâà4,95áâà5,95áâà6
7700000000028650041
95áâà7,95áâà8,95áâà9,95áâà10,95áâà11
7700000000028650042
95áâà12,99ª1áâà1,99ª2,99ª2áâà1
7700000000028650043
99ª2áâà2,101áâà1,101áâà2,101áâà4
7700000000028650044
101áâà5,101áâà6,101ª1,101ª1áâà1
7700000000028650045
101ª1áâà2,103áâà1,105,105áâà1,105áâà2
7700000000028650046
7700000000028680001
4,4áâà2,4áâà3,6ª1,6ª1áâà1,6ª2,8,8áâà1
7700000000028680002
8,10,10áâà1,14,14áâà2,14ª1,14ª1áâà1
7700000000028680003
14ª2,18áâà1,18áâà2,18ª1,18ª2,22áâà2
7700000000028680004
7700000000028680005
1,2,2áâà1,5áâà4,5ª1,6,8
7700000000028690001
1/7,3áâà1,5áâà1,5áâà2,5áâà5,5áâà6
7700000000028710001
7áâà1,7áâà2,7áâà4,7áâà5,14,18,20
7700000000028710003
20áâà2,20áâà3,20áâà4
7700000000028710004
7700000000028710002
7700000000028720001
7700000000028720002
3,4áâà3,4áâà1,5,6áâà1,8áâà1
7700000000028730001
7700000000028740001
2,4,4áâà2,4áâà3,5,6,13,13áâà7,15,15ª1
7700000000028740002
1,1ª1áâà2,2,2ª1,2ª2,2ª2áâà1,2ª2áâà2
7700000000028750001
2ª2áâà10,2ª2áâà11,2ª3áâà1,3ª1,4,4ª1
7700000000028750002
4ª2,4ª2áâà1,4ª3,4ª4,4ª4áâà1,5ª1,5ª2
7700000000028750003
5ª3,5ª3áâà2,5ª4,5ª4áâà2,6,6ª2,6ª3,6ª4
7700000000028750004
6ª5,6ª5áâà1,6ª5áâà2,6ª5áâà3,6ª5áâà4
7700000000028750005
6ª5áâà5,6ª5áâà6,6ª5áâà7,6ª5áâà8
7700000000028750006
6ª5áâà9,6ª5áâà10,7,8,8áâà1,8áâà2,8áâà3
7700000000028750007
8áâà4,8áâà5,8ª3,8ª5,8ª5áâà1,8ª5áâà2
7700000000028750008
8ª5áâà3,9,9ª1,9ª1áâà1,9ª1áâà2,9ª1áâà3
7700000000028750009
9ª2,10áâà2,10áâà3,10áâà4,10ª1,11,12
7700000000028750010
12ª1,13ª1,13ª2,13ª2áâà1,14ª1,14ª2,14ª3
7700000000028750011
15,16ª2,16ª3,16,17áâà1,17áâà2,17ª1
7700000000028750012
17ª2,18ª1,18ª2,18ª3,18ª3áâà1,18ª4
7700000000028750013
18ª4áâà2,18ª5,19ª1,19ª1áâà1,19ª2,19ª3
7700000000028750014
20,21áâà2,21ª1,21ª1áâà2,21ª2,21ª3,23
7700000000028750015
23ª3,23ª4,25áâà3,25ª1,25ª2,27,29áâà2
7700000000028750016
29ª1,31ª1,31ª1áâà1,31ª2,31ª2áâà1
7700000000028750017
3,4,4áâà2,5/6,6áâà1,6áâà2,6áâà3,6áâà5
7700000000028770001
6áâà6,6áâà7,6áâà11,8áâà1,8áâà7,8áâà9
7700000000028770003
8ª1,8ª2,9,9áâà4,9áâà5,9áâà7,9áâà8
7700000000028770004
9/17áâà5,9/17áâà7,9áâà1,9áâà2,9áâà3
7700000000028770005
9áâà5,9áâà6,10áâà1,10áâà2,10áâà3
7700000000028770006
10áâà4,11áâà1,11áâà1,11áâà4,12áâà1
7700000000028770007
12áâà1,12áâà1,12áâà2,12áâà3,12áâà6
7700000000028770008
12áâà6,12áâà7,12áâà8,12áâà9,12áâà17
7700000000028770009
12áâà19,12áâà25,12áâà32,14,15,16áâà1
7700000000028770010
16áâà2,16áâà3,17,19,19áâà2,19,20áâà1
7700000000028770011
20áâà2,20áâà3,20áâà4,20áâà5,21áâà1
7700000000028770012
21áâà4,21áâà5,21áâà7,21áâà12,21áâà13
7700000000028770013
22áâà1,22áâà2,22áâà3,22/2ª1,22áâà1
7700000000028770014
22áâà2,22áâà3,22áâà3,22,23áâà1
7700000000028770015
7700000000028770016
24/2áâà1,24/2áâà5,25/12,25/9,25/9áâà3
7700000000028770017
26/1,27áâà1,27áâà2,28ª1,28ª2,28ª3
7700000000028770018
29áâà3,29ª1,29ª2,30/2áâà1,31/4áâà1
7700000000028770019
7700000000028770002
125032
7,18ª1,18
7700000000028770020
1/3áâà2,1/3áâà5,3áâà1,4,5,6,7,7áâà2
7700000000028790001
7áâà3,7áâà4,8,9,10,11,12,13áâà1
7700000000028790002
13áâà1,13áâà3,14,14áâà1,14ª1,15
7700000000028790003
16áâà1,16áâà2,16/23áâà1,16/23áâà2,17
7700000000028790004
18,19,20/1,21,22,23áâà1,23áâà3,24
7700000000028790005
25áâà1,25áâà2,26,27,27áâà5,28,28áâà1
7700000000028790006
29áâà1,29áâà3,29/66ª1,30,32,34,36áâà1
7700000000028790007
6,6áâà2,6/7áâà2,8,10,14,14áâà3,16,18
7700000000028800001
20áâà4,20_22áâà2,26,26,38,40,46áâà1
7700000000028800002
3áâà2,3/4áâà2,5,7,7áâà2,11,12áâà1
7700000000028810001
12áâà2,12áâà3,13,15,20áâà1,21/23
7700000000028810002
22áâà2,22áâà5,22/21áâà1,24,24áâà2,26
7700000000028810003
29/6,30/29áâà1,30/29áâà4,31_35,39áâà1
7700000000028810004
39áâà2,39áâà3,42/8,44,44ª1,46áâà1,48
7700000000028810005
2/11áâà1,2/11áâà2,3,4,4áâà2,5,6/12,8/9
7700000000028820001
10,12áâà1,12áâà2,13,14áâà3,14áâà4,14ª1
7700000000028820002
14ª3,16,16ª1,16ª2,16ª3,20áâà1,20áâà3
7700000000028820003
20áâà5,21,22,22ª2,23,24,25,26/8
7700000000028820004
3,3áâà1,3áâà2,9,11áâà1,11áâà2,13áâà1
7700000000028830001
15áâà1,15áâà2,17áâà1,17áâà2,17áâà3
7700000000028830002
17áâà4,17áâà7,17áâà8,19,19áâà2,23áâà1
7700000000028830003
23áâà3,23áâà4,25áâà1,25áâà2,25áâà4
7700000000028830005
25áâà6,25áâà7,27áâà1,27áâà6
7700000000028830006
2,6,8áâà1,8áâà2,10áâà1,10áâà2,10áâà4
7700000000028830007
12áâà1,12áâà2,12áâà3,14áâà1,14áâà3
7700000000028830008
14áâà4,14áâà5,14áâà11,14áâà12,16
7700000000028830009
16áâà5,18áâà1,18áâà2,18áâà3,18áâà4
7700000000028830010
20áâà1,20áâà4,22,24áâà1,24áâà5
7700000000028830011
26
7700000000028830004
26,26áâà1,26áâà2,26áâà3,26/5
7700000000028830012
11,14,14áâà2,14áâà3,14áâà4,16,18
7700000000028840001
18áâà8,18/3áâà4,18/3áâà7
7700000000028840002
7700000000028850001
7700000000028860001
2áâà1,2áâà27,2ª1,2áâà15,4,6,8,8áâà1
7700000000028900001
10ª1,12,12áâà1,12,14
7700000000028900002
3,3áâà1,4,4áâà1,5,5áâà2,5ª1,7,10
7700000000028910001
2,4,4áâà1,6,6áâà1,8,8áâà2,10,12ª1,12ª2
7700000000028920001
12ª3,12ª4,12ª4áâà1,12ª4áâà2,12ª4áâà3
7700000000028920002
12ª5,12,12,14/2,14/2áâà1,21ª1,21ª2
7700000000028920003
21ª3,21ª4,21ª4áâà1,21ª4áâà3,21ª5,21ª6
7700000000028920004
21ª6áâà1,21ª6áâà3,21,21,23,23áâà1
7700000000028920005
23áâà2,25,25áâà1,25ª1,25ª3,25ª4,25ª5
7700000000028920006
25ª6,25,27,27áâà1,27áâà2,27áâà3
7700000000028920007
27áâà6,29,31
7700000000028920008
1,1áâà2,1,1áâà1,1áâà1,1áâà2,1áâà3
7700000000028920009
1áâà4,1áâà5,1áâà6,1áâà7,1,1
7700000000028920010
3áâà1,3ª1,3ª2,3ª2áâà1,3ª2áâà2,5ª1,5ª2
7700000000028920011
5ª3,5ª3áâà1,5ª4,5ª4áâà1,5ª4áâà2,5,7
7700000000028920012
7áâà1,7ª1,7ª1áâà1,7ª2,7ª2áâà1,7ª3,9ª1
7700000000028920013
9ª1áâà1,9ª1áâà2,9ª2,9ª3,9ª3áâà1,9ª4
7700000000028920014
9ª4áâà1,9ª4áâà2,9ª5,9ª5áâà1,9ª6,9ª7
7700000000028920015
9ª7áâà1,9ª8,9ª9,9ª9áâà1,9,11ª1
7700000000028920016
11ª1áâà1,11ª2,11,13ª1,13ª1áâà1,13ª2
7700000000028920017
13ª2áâà1,13ª3,13ª4,15áâà1,15ª1
7700000000028920018
15ª1áâà1,15ª1áâà3,15ª2,15ª2áâà1
7700000000028920019
15ª2áâà2,15ª3,15ª4,15ª4áâà1,15ª4áâà2
7700000000028920020
15ª5,15ª6,15ª7,15ª9,15ª10,17
7700000000028920021
1,1áâà2,1áâà3,1,3,3áâà1,3áâà2,3áâà3
7700000000028930001
3áâà4,3áâà5,3áâà6,3áâà7
7700000000028930002
2,3,3,4áâà1,4áâà2,5áâà1,5áâà2,5áâà3
7700000000028940001
7700000000028940002
5áâà10,5áâà11,5áâà12,5áâà13,5áâà14
7700000000028940003
5áâà15,5áâà16,5áâà17,6/19áâà1
7700000000028940004
2,2áâà2,4áâà1,4áâà2,4áâà4,8,12
7700000000028950001
12áâà2,12áâà4,12áâà5,14áâà1,14áâà2
7700000000028950002
15áâà1,15áâà3,15áâà13,16,18áâà6
7700000000028950003
7700000000028970001
1,1áâà1,1áâà2,4,6,7,7áâà2,8,9,10,11ª1
7700000000028980001
11ª1áâà2,11ª1áâà3,11ª1áâà4,11ª1áâà6
7700000000028980002
11ª2,12,12áâà1,12áâà2,12áâà3,12áâà6
7700000000028980003
12áâà12,12,14,15,15áâà2,15áâà3,15áâà4
7700000000028980004
7700000000028980005
7700000000028980006
7700000000028980007
7700000000028980008
15áâà23,15áâà24,15áâà25,15áâà26
7700000000028980009
7700000000028980010
15áâà33,15áâà36,15áâà37,15áâà38
7700000000028980011
7700000000028980012
7700000000028980013
15áâà47,15áâà55,15áâà56,15áâà57
7700000000028980014
15áâà58,15áâà59,15áâà60,15áâà62
7700000000028980015
15áâà63,15áâà64,15áâà65,15áâà66
7700000000028980016
15áâà67,15áâà72,15áâà73,15áâà74
7700000000028980017
15áâà76,15áâà77,15áâà78,15áâà79
7700000000028980018
15áâà80,16,16áâà4,16áâà6,17áâà5,17ª1
7700000000028980019
17ª2,17ª2,17ª2,18,18áâà2,18áâà3
7700000000028980020
7700000000028980021
18ª34,19,19áâà1,19áâà1,20,21,23
7700000000028980022
23áâà2,23áâà3,23áâà4,23ª2áâà5,24
7700000000028980023
24áâà2,26,26,28,29,30,30áâà2,32,34,36
7700000000028980024
36áâà2,36áâà3,36áâà4,36ª2,38,38,40
7700000000028980025
40áâà2,40ª2,44,44áâà2,46
7700000000028980026
áâà1,2,2,4,5,5,5áâà1,5áâà2
7700000000028990001
5áâà3,5áâà4,5áâà5,5áâà6,5áâà7
7700000000028990002
5áâà8,5áâà9,6,6áâà1,7,10áâà1,10áâà2
7700000000028990003
7700000000028990004
7700000000028990005
7700000000028990006
10áâà9,10áâà10,12,14,24
7700000000028990007
7700000000029010001
1,1áâà1,1ª2,2,2áâà1,2áâà2,3,3áâà1,5,6
7700000000029020001
7,7ª2áâà2,8,8,10,10ª1,10ª1áâà1,11ª1
7700000000029020002
11ª2,12ª3,13,13ª2,13ª2áâà1,14ª1
7700000000029020003
14ª1áâà1,14ª1áâà2,14ª2,14ª3,15ª1,15ª2
7700000000029020004
17ª1,17ª1áâà1,17ª1áâà2,17ª2,17ª3,19,21
7700000000029020005
2,2áâà1,18áâà1,18áâà2,18áâà3,18áâà4
7700000000029030001
1áâà1,1áâà4,1áâà6,1áâà7,1áâà1,3
7700000000029040001
6,6áâà5,8
7700000000029040002
1,1áâà3,1áâà4,2,2áâà2,2áâà3,8áâà1
7700000000029050001
8áâà2,10áâà1,10áâà2,12,12áâà2,19áâà1
7700000000029050002
19áâà3,22,24,37,37áâà2,38,38áâà1
7700000000029050003
38áâà2,38áâà2,39,40áâà1,40áâà2,41áâà1
7700000000029050004
41áâà2,41áâà3,43,43/20,43/20áâà2,43áâà1
7700000000029050005
11/12,13,14_16,14_16áâà2,15,15áâà2,19
7700000000029060001
19áâà2,19áâà3,20,22,23áâà1
7700000000029060002
3,5áâà1,5áâà2,5áâà2,5áâà3,5áâà4,5áâà5
7700000000029070001
5/7áâà1,5/7áâà2,5_7áâà1,7_9áâà1
7700000000029070002
8,10,14,14áâà4,16,24_26,28
7700000000029070003
28/14,28/14áâà2,32,32,33,33áâà1,34/5
7700000000029080001
36,37,38,38áâà2,38áâà3,38áâà4,38áâà5
7700000000029080002
42,43,44,45,46,47,48,48,48áâà2
7700000000029080003
48áâà3,48áâà4,49
7700000000029080004
1,1áâà1,1,1,5áâà1,5áâà2,5áâà3,5áâà4
7700000000029080005
5áâà5,5áâà5,5áâà7,5áâà9,5áâà10,5áâà11
7700000000029080006
5áâà13,5áâà15,5áâà16,5,7,7áâà1,10,11
7700000000029080007
11áâà2,12,13,13áâà1,13áâà2,13áâà3
7700000000029080008
13áâà4,15,17,17áâà2,18ª1,18ª2,18ª3
7700000000029080009
18ª4,18ª5,18ª6,19,19áâà4,19áâà6,19áâà7
7700000000029080010
19áâà8,19áâà9,19áâà10,19áâà12,19áâà13
7700000000029080011
19ª2,19ª3,25áâà1,25áâà2,25áâà3,25áâà4
7700000000029080012
25áâà6,25áâà7,26,26áâà1,26áâà2,26áâà3
7700000000029080013
26áâà4,26áâà5,26áâà6,26áâà7,26áâà9
7700000000029080014
26áâà10,26áâà11,27,27áâà2,27áâà3
7700000000029080015
5áâà1,5áâà2,13,13áâà1
7700000000029080016
1áâà1,1áâà2,1áâà3,1áâà4,1áâà6,3,3áâà4
7700000000029090001
4áâà1,4áâà2,4áâà3,4áâà4,4áâà5,6,6áâà2
7700000000029090002
7áâà1,7áâà2,7áâà3,7áâà6,8áâà1,8áâà2
7700000000029090003
8ª1,10áâà1,10áâà2,10áâà4,13,17áâà1
7700000000029090004
17áâà1,19,20áâà1,20áâà2,20áâà4,21
7700000000029090005
21áâà1,21áâà2,22,23áâà1,24áâà4,24áâà7
7700000000029090006
25áâà1,25áâà2,27áâà1,27áâà2,29áâà1
7700000000029090007
29áâà2,29ª1,30áâà1,30áâà1,30áâà2
7700000000029090008
30áâà4,30áâà7,30áâà9,31áâà1,31áâà3
7700000000029090009
31áâà5,31áâà6,31áâà15,34,34ª1,36/16
7700000000029090010
7700000000029100001
3_5,4,5áâà1,5áâà2,7,8,8áâà3,9,10áâà3
7700000000029110001
11,12/20,12/20áâà2,13_15,14,14áâà3
7700000000029110002
16áâà1,16áâà2,17áâà3,17áâà4,17áâà9
7700000000029110003
20/31áâà1,20/31áâà2,21ª2,21/2áâà1
7700000000029110004
21/2áâà2,21/2áâà3,21/2áâà5,23
7700000000029110005
2ª1,2ª2,3,3ª2,3ª2áâà2,4ª1,4ª2,4ª2áâà3
7700000000029120001
5ª1,5ª2,5ª3,5ª4,6ª1,6ª2,6,7áâà3,7ª1
7700000000029120002
7ª1áâà3,7ª2,7ª2áâà1,7ª3,8ª1,8ª2,8ª3
7700000000029120003
8ª3áâà3,8ª4,8ª4áâà1,8ª5,9ª1,9ª2,10áâà5
7700000000029120004
10ª1,10ª1áâà4,10ª2,10ª3,10ª4,10ª4áâà2
7700000000029120005
11ª1,11ª2,11ª2áâà2,12ª1,12ª2,13ª1
7700000000029120006
13ª1áâà1,13ª2,13ª3,13ª4,13ª4,13ª5
7700000000029120007
13ª5áâà3,13ª6,13ª7,14
7700000000029120008
7700000000029130001
4áâà1,5áâà1,5áâà3,5áâà4,5áâà4,5áâà5
7700000000029130002
5áâà6,5áâà7,5áâà7,5áâà8,5áâà9,5áâà11
7700000000029130003
5áâà12,5áâà13,5áâà14,5áâà15,5áâà40,16
7700000000029130004
18/17áâà1,18/17áâà10
7700000000029130005
4áâà1,6áâà1,8áâà1,8áâà2,8áâà3,8/11áâà1
7700000000029140001
8/11áâà3,9,10,10áâà1,10áâà8,12,12/16áâà6
7700000000029140002
3,3áâà2,4,6,7,8áâà1,8áâà5,9,9áâà2,10
7700000000029150001
7700000000029150002
áâà1,1,2áâà1,2áâà2,2áâà3,2áâà5,2áâà6
7700000000029170001
2áâà9,2áâà10,2,3,3áâà2,3áâà8,8áâà1,8
7700000000029170002
9,11ª1,11ª2,13ª1,13ª2,13ª2áâà6
7700000000029170003
13áâà1,13áâà2,13áâà3,13áâà4,15áâà1
7700000000029170004
7700000000029170005
7700000000029170006
1áâà6,1/26áâà1,1/26áâà2,1/26áâà7
7700000000029200001
1_1áâà1,2,3,3áâà1,3áâà2,3,4áâà1
7700000000029200002
4áâà2,6,8,11áâà1,11áâà2,11áâà3,11áâà4
7700000000029200003
11áâà5,11áâà6,11áâà8,15áâà1,15áâà2
7700000000029200004
8/10áâà1
7700000000029210001
12/7áâà1,12/7áâà2,12/7áâà3
7700000000029210002
1,1áâà2,1áâà3,5áâà1,6/20áâà1,7
7700000000029220001
1,1áâà2,1áâà3,2áâà1,2áâà2,2áâà3
7700000000029230001
2_4áâà1,2_4áâà3,3,4ª1,4ª2,5,6,6,7áâà1
7700000000029230002
8,10,12áâà1,12áâà2,14áâà1,14áâà3
7700000000029230003
14áâà5,16,16áâà2,16áâà4,18,20,22áâà1
7700000000029230004
22áâà2,24
7700000000029230005
5,9áâà1,9áâà2,9áâà4,9áâà7,9áâà8
7700000000029240001
11/13áâà1,11/13áâà2,11_13áâà5
7700000000029240002
11_13áâà9,15
7700000000029240003
4áâà1,4áâà6,6,6áâà2,6áâà5,6áâà6,6áâà7
7700000000029240004
8,8áâà2,10/2,10/2áâà2,10/2áâà4,14,14áâà1
7700000000029240005
2,2áâà5
7700000000029240006
4,4áâà2,11,12,17áâà1,17áâà2,17áâà3
7700000000029260001
7700000000029260002
24áâà1,34,36,38áâà1,54áâà3,54áâà4,54ª1
7700000000029260003
54ª2,56
7700000000029260004
26,28áâà1,28áâà3,31,45,45,45áâà1
7700000000029260005
45,47áâà1,47,47,49,51áâà1,51áâà2
7700000000029260006
55,57áâà1,57áâà2,57áâà4,57ª1,57ª1áâà2
7700000000029260007
57ª2,57,61áâà3,61ª1,61ª2
7700000000029260008
3áâà1,3áâà2,3áâà5,3áâà9,3áâà11
7700000000029270001
3,4/7
7700000000029280001
5,6,7áâà4,7áâà4,7áâà5,7/1áâà1,7/1áâà2
7700000000029290001
7/1áâà3,8,9áâà2,9ª1,10áâà1,10áâà2
7700000000029290002
10áâà3,13,15áâà1,17áâà1
7700000000029290003
12,12ª5
7700000000029300001
2/9áâà3,3,4,5,6,6áâà3,6áâà9,6ª9,6áâà2
7700000000029310001
6áâà3,6áâà5,6áâà13,8/10áâà1
7700000000029310002
8/10áâà2,8/10áâà4,8/10áâà5
7700000000029310003
4,4áâà1,4áâà2,4áâà3,6áâà1,6áâà2,6áâà3
7700000000029320001
7700000000029320002
6áâà10,6_,6_áâà1
7700000000029320003
8,8áâà2,28áâà1,28áâà2,28áâà3,28áâà4
7700000000029330001
28áâà5,28áâà16,28áâà18
7700000000029330002
1áâà4
7700000000029330003
2,12,18,20,22/1
7700000000029340001
15,15áâà1,17áâà1,17áâà2,19/12áâà1
7700000000029340002
19/12áâà2,21,21áâà3,21,23áâà1,23ª2
7700000000029340003
25áâà1,25áâà2,25áâà3,25ª1,26ª1,26
7700000000029340004
26áâà2,27áâà1,27áâà2,27áâà3,27áâà4
7700000000029340005
28áâà1,28áâà2,28áâà3,29,29áâà1,29áâà4
7700000000029340006
29áâà5,29áâà6,30áâà1,30áâà2,30áâà3,31
7700000000029340007
31áâà1,32áâà1,32áâà3,32áâà4,33áâà1
7700000000029340008
33ª2,35,35áâà1,35áâà8,36,36áâà3,37áâà1
7700000000029340009
11,13áâà1,15áâà1,15áâà2,15áâà5,17áâà1
7700000000029350001
19,21áâà1,21áâà2,22áâà1,22áâà2,23áâà1
7700000000029350002
23áâà2,24áâà1,24áâà2,26áâà1,26áâà2
7700000000029350003
28áâà1,30áâà1,30áâà3,30áâà4,30áâà7
7700000000029350004
30áâà1,30áâà2,32,34áâà1,34áâà3
7700000000029350005
4,4áâà2,6,6áâà4,8/15
7700000000029350006
7700000000029360001
2/21áâà1
7700000000029370001
2,2áâà1,2áâà2,2áâà3,4,4áâà4,4áâà5,8,10
7700000000029420001
7700000000029420002
7700000000029420003
10áâà26,10áâà38
7700000000029420004
7700000000029420005
9,11,13,15,19,52áâà3
7700000000029420006
43,43áâà2,44,44áâà1,45áâà1,46,48,50
7700000000029420007
52,54,54áâà2,54ª3,56
7700000000029420008
2/1ª2,2/1ª3,2/1ª4,2/1ª5,2/1ª8
7700000000029430001
2/1ª8áâà14,2/1ª9,2/1ª9áâà3,2/1ª18
7700000000029430003
2/1ª19,2/1ª20,2/1ª21,2/1ª22,2/1ª24
7700000000029430004
2/1ª25,2/1ª26,2/1ª27,2/1,3,6,6áâà2
7700000000029430005
6áâà3,6áâà4,7,8,15,16,22,22áâà2,24
7700000000029430006
7700000000029430007
7700000000029430008
25áâà26,25áâà38
7700000000029430009
24áâà1
7700000000029430002
28,34áâà1,34áâà2,45,45áâà12,45áâà18
7700000000029430010
45áâà23,45ª5,45ª6,55ª4,55ª4áâà2,57
7700000000029430011
57áâà1,57ª1,57,59,59,59áâà1,59áâà2
7700000000029430012
59áâà3
7700000000029430013
3,4,5,6,7,9,11
7700000000029450001
6áâà1,9áâà1,9áâà2,9áâà3,9áâà4,13áâà1
7700000000029460001
13,15,15áâà7,15ª2,15ª4,15ª5,15ª7
7700000000029460002
15ª9,15ª10,15ª12,15ª15,15ª16,15ª17
7700000000029460003
15ª18,15ª19,15ª22,15ª23,15ª24,15ª25
7700000000029460004
15ª26,15ª27,15ª28,15ª29,17,19áâà1,19áâà2
7700000000029460005
1áâà3,1/7áâà2,3
7700000000029460006
8,8áâà1,10,10áâà1,10ª1,10ª1áâà1
7700000000029470001
10ª1áâà2,13ª1,13ª1áâà1,13ª1áâà3,13ª2
7700000000029470002
14ª1,14ª2,14ª3,14ª4,14ª4áâà2,14ª5,14ª6
7700000000029470003
15,16ª2,16ª3,16ª3áâà1,17,19ª1,19ª1áâà1
7700000000029470004
19ª2,19ª2áâà1,19ª3,19ª4,19ª4áâà1,19ª5
7700000000029470005
19ª6,21,23,23áâà1
7700000000029470006
1,2ª1,2ª2,2ª3,2ª4,2ª5,3,4ª1,4ª2,4ª3
7700000000029470007
4ª4,4ª4áâà1,4ª5,4ª5áâà1,4ª5áâà2
7700000000029470008
4ª5áâà3,5,6áâà1,6ª1,6ª2,6ª3,6ª4,7,7ª2
7700000000029470009
9,11,11ª2
7700000000029470010
18,20ª1,20ª2,20ª2áâà3,22ª1,22ª1áâà1
7700000000029470011
22ª2,24ª1,24ª1áâà1,24ª1áâà2,24ª2,25ª1
7700000000029470012
25ª2,25ª2áâà1,25ª2áâà2,25ª2áâà11,25ª3
7700000000029470013
25ª4,25ª4áâà1,25ª4áâà2,27ª1,27ª2,27ª3
7700000000029470014
29ª1,29ª1áâà2,29ª2,29ª2áâà2,31ª1,31ª2
7700000000029470015
33,33ª1,33ª2,33ª2áâà1,33ª2áâà2
7700000000029470016
3áâà1,4áâà1,5,5áâà1,20
7700000000029480001
48,50,50ª2,50ª2áâà1,50ª2áâà3,50ª2áâà4
7700000000029500001
51,51ª1,52,52áâà1,52ª2áâà2,54,55
7700000000029500002
55áâà1,56áâà3,56ª1,56ª2,56ª3,58,58ª2
7700000000029500003
58ª3,60,61ª2,61ª2áâà5
7700000000029500004
20áâà2,20áâà3,20ª1,20ª2áâà1,21ª1,21ª2
7700000000029500005
22ª1,22ª2,22ª3,22ª3áâà1,22ª3áâà2,22ª5
7700000000029500006
22ª5áâà1,23ª1,23ª2,23ª2áâà1,23ª3,24ª1
7700000000029500007
24ª2,24ª3,25áâà4,25ª1,25ª2,25ª3,26ª1
7700000000029500008
26ª1áâà1,26ª2,28ª1,28ª1áâà1,28ª1áâà2
7700000000029500009
28ª2,29,29áâà2,30,32,32ª,32ª2
7700000000029500010
32ª2áâà4,32ª2áâà5,33,33áâà1,34,35ª1
7700000000029500011
35ª1áâà3,36,37/21,37/21áâà1,38áâà1
7700000000029500012
38ª1,38ª2,39,39ª2,40ª1,40ª2,41ª1,42ª1
7700000000029500013
42ª2,42ª3,42ª4,43ª1,43ª2,43ª2áâà9,44ª1
7700000000029500014
44ª2,44ª3,45ª1,45ª2,46,46áâà2,46áâà3
7700000000029500015
46áâà4,46áâà5,46áâà6,47,49
7700000000029500016
15,17ª1,17ª1áâà1,17ª2,17ª3,18,19,19áâà1
7700000000029500017
14ª1,14ª1áâà1,14ª1áâà2,15áâà2,16ª1
7700000000029500018
16ª1áâà1,16ª2
7700000000029500019
2,3,4,4,5,6,6áâà2,7,9,9áâà1,9áâà4,9ª2
7700000000029510001
9,11,11ª2,13,13áâà2
7700000000029510002
1,2,6,7,8,8áâà1,9ª1,9ª3,9ª3áâà2,10,11
7700000000029520001
11áâà1,11áâà4,11áâà15,11ª1,11ª1áâà1
7700000000029520002
11ª1áâà2,11ª1áâà3,11ª1áâà4,11ª2
7700000000029520003
11ª2áâà1,11ª3,11ª3áâà6,11ª4,12,13,13ª1
7700000000029520004
13,15áâà1,16,17,17áâà1,19,22,22áâà2
7700000000029520005
22áâà3,22áâà4,22áâà5,22áâà6,24ª1áâà1
7700000000029520006
7700000000029520008
7700000000029520009
24áâà11,24áâà12,24áâà13,24áâà14
7700000000029520010
24áâà15,24áâà16,24áâà17,24áâà20
7700000000029520011
3,4,5,6ª1,6ª1áâà1,7,7áâà2,8áâà1,8ª1
7700000000029530001
8ª1áâà3,10ª1,12,13,14,15,17,19,19áâà1
7700000000029530002
2,4,8,10,10áâà1,10áâà2,10ª1áâà1,12
7700000000029540001
12áâà1,12áâà2,12áâà6,12áâà8,12áâà10
7700000000029540002
2,7,7,7áâà2,7áâà3,7áâà4,7áâà5
7700000000029550001
1,1áâà1,2,2áâà1,2áâà2,3,3áâà1,3áâà2
7700000000029560001
7700000000029560002
5áâà2,5ª1,5ª2,6,7ª1,7ª1áâà1,7ª1áâà3
7700000000029560003
7ª2,7ª2áâà1,9,11,13,14áâà1,15,17
7700000000029560004
17áâà2,19,21,21áâà1,23ª1,23ª1áâà1,25
7700000000029560005
25ª1,25ª2,25,27,27áâà1,29ª1,29ª1áâà1
7700000000029560006
29ª2,29ª3,29ª3áâà1,29ª3áâà2,29ª4
7700000000029560007
29ª4áâà1,29,31,31ª1,31ª1áâà1,31ª1áâà2
7700000000029560008
33,35,37,37áâà1,37áâà2,39,41,41
7700000000029560009
41áâà1,41
7700000000029560010
11áâà1,13,15,17áâà1,19,21,25_27
7700000000029570001
7700000000029580001
13áâà9,13áâà10,13áâà11,13áâà17,13áâà18
7700000000029580002
7700000000029580003
13áâà23,13áâà25,13áâà1,13áâà2
7700000000029580004
13áâà3,22áâà2
7700000000029580005
áâà13,áâà13,11áâà1,12ª2,13áâà1
7700000000029590001
13áâà2,13áâà3,13áâà4,13áâà7,13áâà8
7700000000029590002
13áâà10,13áâà12,13áâà13,13áâà19
7700000000029590003
2,2áâà1,4,4ª1,6,6áâà1,6áâà2,6ª2
7700000000029590004
6ª2áâà1,6,8
7700000000029590005
1,1ª1,1,3ª2,3ª2áâà1,3ª2áâà3,3ª3,3ª4
7700000000029610001
3ª5,3ª6,3ª7,3ª8,3ª9,3ª10,3ª11,3ª12
7700000000029610002
3ª12áâà1,3ª12áâà2,3ª13,3ª14,4,4áâà1
7700000000029610003
5ª1,5ª1áâà1,5ª2,5ª3,6,6áâà1,6áâà2,7ª1
7700000000029610004
7ª1áâà1,7ª2,8,9,10,10áâà2,10ª1,11,12
7700000000029610005
12áâà1,12áâà2,14,14áâà1,14áâà2,15
7700000000029610006
15áâà1,16,16ª1,16,17ª1,17ª1áâà1,17ª2
7700000000029610007
18,19ª1,19ª2,19_,21,23,23áâà1,27
7700000000029610008
27áâà1,31,31,31áâà1,33,35,37,39,41
7700000000029610009
43,45,45áâà1,47
7700000000029610010
22,22ª2,24,26,26áâà1,26áâà2,26ª1,28
7700000000029610011
28áâà1,28áâà2,30,32,32áâà2,32ª1,34,36
7700000000029610012
49,51,53,55,57,59,60,61,61áâà1,63
7700000000029610013
63áâà1,65,65áâà1,65,65,67,67,69
7700000000029610014
69áâà1,69,69,69áâà1,71,73,73áâà1
7700000000029610015
73áâà2,75,75,77,77áâà1,79,79áâà1
7700000000029610016
79áâà2,81,81áâà1
7700000000029610017
40,40,42,44,46,46áâà,48,48áâà1,50
7700000000029610018
50áâà1,52,54,54áâà1,60áâà1,85,85áâà2
7700000000029610019
85ª1,85ª2,85ª3,85ª4,85ª5,85ª6,85
7700000000029610020
85áâà1,85áâà2,85áâà3,85áâà4
7700000000029610021
85áâà5,85áâà6,85áâà7,85áâà8
7700000000029610022
64,87,87áâà,87ª1,87ª2,87ª3,87ª3áâà1
7700000000029610023
87ª4,87ª5,89,89áâà1,89áâà3,89ª1,89ª2
7700000000029610024
89ª3,89ª3áâà1,89,93áâà1,93áâà2,93áâà3
7700000000029610025
2áâà1,3,5,5áâà2,6,6áâà3,6ª2,6áâà1
7700000000029620001
6áâà2,7,8áâà1,8ª2,8,9,11,11áâà2,13
7700000000029620002
13áâà2,15
7700000000029620003
24,24áâà1,24áâà2,24áâà3,24ª4,24ª4áâà1
7700000000029640001
26ª1,26ª1áâà3,26ª2,26áâà1,26áâà2,28
7700000000029640002
28ª1,28ª2,30,30ª1,30ª1áâà1,30ª2,30ª3
7700000000029640003
32,32_34áâà1,32_34áâà7,32_34áâà10,32
7700000000029640004
7,7,9áâà1,9/11áâà1,9/11ª1,9/11ª2
7700000000029640005
9áâà1,9,11,11áâà2,11áâà3,13ª1,13ª2
7700000000029640006
15ª1,17ª1,17ª2,19
7700000000029640007
7700000000029640008
7700000000029640009
7700000000029640010
44áâà7,46,46áâà1,46áâà3
7700000000029640011
6,6ª1áâà1,8ª1,8ª2,10/1ª1,10/1ª2,12ª1
7700000000029640012
12ª2,14ª1,16ª1,16ª2,16ª2áâà2,16ª3
7700000000029640013
16ª3áâà1,16ª4,18ª1,20ª1
7700000000029640014
31,31áâà1,31áâà2,33ª10,35áâà1,35áâà2
7700000000029640015
35áâà4,37áâà1,37áâà2,37áâà3,37ª4,39
7700000000029640016
43ª1,43ª1áâà1,43ª2,43ª2áâà2,43ª3
7700000000029640017
43ª3áâà1,45ª1,47ª1,47ª2,47ª2áâà2,49ª1
7700000000029640018
49ª2,51
7700000000029640019
25,25ª1,25ª2,27/12ª1,27/12ª2,27/12ª3
7700000000029640020
3,4ª1,4ª2,4ª2áâà2,5
7700000000029640022
13,13áâà2,13áâà3,13áâà4,13áâà5,13áâà6
7700000000029670001
7700000000029670002
13áâà12,13áâà13,13áâà14,13áâà15,13áâà16
7700000000029670003
3,3áâà2,5,5,7,7áâà1,9,9,9
7700000000029670004
12,12áâà1,12,14,16,16áâà1,19,21áâà5
7700000000029670005
21ª1,21ª2,21ª3,21ª4,21ª4áâà1,23ª1
7700000000029670006
23ª1áâà2,23ª2,23ª3,23ª4,25,25áâà1
7700000000029670007
7700000000029670008
4,4,4áâà1,4ª1,6ª1,6ª2,6ª3,6ª4
7700000000029670009
23,23ª1,23ª2,23ª2áâà2,23ª3,23ª4,23ª4áâà1
7700000000029680001
2áâà1,2áâà2,2áâà3,2áâà1,4,4áâà1
7700000000029680002
7700000000029680003
4áâà1,4,6,6áâà1,6ª1,6ª1áâà2,6ª2,6ª3
7700000000029680004
6ª3áâà1,6ª3áâà3,6ª4,6ª5,6ª5áâà1,6ª6
7700000000029680005
6ª7,6ª8,6ª8áâà1,6áâà1,6áâà2,8,12áâà1
7700000000029680006
12/21,12/21áâà2,12/21áâà4,25
7700000000029680007
1,1áâà1,1áâà2,1áâà3,1,1áâà1,1áâà1,3
7700000000029680008
3,5,5,7,9,9áâà2,11,11áâà2,13,13áâà1
7700000000029680009
13áâà2,13áâà3,13áâà4,15,15,17,19,19ª1
7700000000029680010
19ª2,19ª2áâà2,19ª3,19ª4,19,21
7700000000029680011
1ª1,1ª2,3ª1,3ª2,3ª2áâà1,3ª2áâà2,3ª3
7700000000029690001
3ª4,4áâà1,4áâà2,4áâà3,4áâà6,4áâà14
7700000000029690002
4áâà15,4áâà20,4áâà22,4áâà29,4áâà30
7700000000029690003
4áâà31,4áâà33,4áâà34,5ª1,5ª2,7,8
7700000000029690004
1áâà1,1áâà2,1áâà3,1áâà3,1áâà2,2áâà1
7700000000029700001
2áâà2,2áâà3,2áâà4,3,4,4áâà2,6,7/1,9
7700000000029700002
10áâà1,10áâà2,11áâà1,11áâà1,11áâà2
7700000000029700003
11áâà5,11áâà6,11áâà7,11áâà11,11áâà14
7700000000029700004
11áâà17,11áâà26,11áâà26,11áâà33
7700000000029700005
11áâà34,11áâà101,17áâà1,17áâà2,19ª2
7700000000029700006
19ª3,19ª4,19áâà1,19áâà7,19ª1,19ª2
7700000000029700007
19ª3,21,22,22áâà2,24,25,26,29áâà5
7700000000029700008
29áâà13,29áâà18,29ª1,29ª2,29ª3,29ª7
7700000000029700009
29ª8,29ª9,33áâà1,33áâà2,33áâà3,33áâà4
7700000000029700010
33áâà5,35áâà1,35áâà2,35áâà3,35áâà4,35
7700000000029700011
37áâà1,37áâà2,37áâà3,38,38áâà2,40
7700000000029700012
40áâà1,50,50áâà2,50áâà3,52,52áâà2,62
7700000000029700013
62áâà2,64,64áâà2,64áâà4,66
7700000000029700014
20áâà4,20ª1,20ª2,20ª3
7700000000029710001
12,15,15áâà2,16,17,19,21,23,23áâà2
7700000000029710002
23áâà4
7700000000029710003
18,18,18áâà2,18áâà3,22áâà2,22ª1,24
7700000000029710004
25ª1,25ª1áâà1,25ª2,25ª3,25ª3áâà2,27ª1
7700000000029710005
27ª2,29áâà2,29ª1,29ª2,29ª2áâà1,29,29
7700000000029710006
31áâà2,31áâà3,31áâà4,31ª1,31ª2,31ª3
7700000000029710007
31,31áâà2,31áâà3
7700000000029710008
1,1,2,2áâà2,3,4,5,6,6áâà2,7,8,8áâà1
7700000000029710009
8áâà2,9,10,10,10áâà2,11,13
7700000000029710010
1,1ª1,1ª2,1ª2áâà1,1ª2áâà2,1ª3,1ª3áâà1
7700000000029720001
1ª4,1ª5,1ª5áâà1,1ª6,1ª6áâà1,1áâà1
7700000000029720002
1áâà1,3ª1,3ª1áâà2,4,5,5ª1,5ª1áâà2,5ª2
7700000000029720003
5ª2áâà1,5ª3,7,7áâà2,8,8áâà1,8áâà2,8ª1
7700000000029720004
8,9,9áâà2,9,10,11ª1,11ª1áâà1
7700000000029720005
11ª1áâà2,11ª2,11ª3,12,12áâà2,14,14áâà3
7700000000029720006
14ª2,14,14áâà1,16,16áâà1,16áâà1
7700000000029720007
2áâà4,2/14áâà1,2/14áâà2,2/14áâà3
7700000000029740001
2/14áâà5,2/14áâà7,2/14áâà8,2/14áâà9
7700000000029740002
2/14áâà10,2/14áâà11,2/14áâà12
7700000000029740003
2/14áâà13,2/14áâà14,2/14áâà21
7700000000029740004
1,2,3,4áâà1,4áâà2
7700000000029750001
1,1áâà1,1áâà3,1,3ª1,4,6,6áâà1,7,7áâà3
7700000000029760001
8,10,10áâà2,11
7700000000029760002
9,13,15ª1,15ª2,17ª1,17ª2,18áâà1,18áâà2
7700000000029770001
18áâà3,18áâà4,18ª1,18ª1áâà1,18ª2,19ª1
7700000000029770002
19ª2,19ª3áâà1,19ª3áâà2,19ª3áâà3
7700000000029770003
19ª3áâà4,19ª3áâà5,19ª3áâà6,19ª3áâà7
7700000000029770004
19ª3áâà8,19ª3áâà9,19ª3áâà10,19ª3áâà11
7700000000029770005
19ª3áâà12,19ª3áâà13,20,20áâà1,20ª2áâà2
7700000000029770006
21,22,22áâà1,22áâà2,23ª1,23ª2,24áâà1
7700000000029770007
24áâà2,25ª1,25ª2,25ª2áâà3,26,27ª1,27ª2
7700000000029770008
29ª1,29ª1áâà1,30,31,32áâà1,32ª2,33ª1
7700000000029770009
33ª2,33ª3,33ª4,33ª4áâà1,33ª5,33ª5áâà1
7700000000029770010
33ª6,33ª6áâà1,33,33áâà1,33áâà2
7700000000029770011
33áâà3,33áâà4,33áâà5,33áâà6
7700000000029770012
33áâà7,33áâà8,33áâà9,33áâà10
7700000000029770013
33áâà11,33áâà12,33áâà13,33áâà14
7700000000029770014
33áâà15,33áâà16,33áâà17,33áâà18
7700000000029770015
33áâà19,33áâà20,33áâà21,33áâà22
7700000000029770016
33áâà23,34ª1,34ª2,34ª2áâà3,36,36ª1
7700000000029770017
36ª1áâà1,38ª1,38ª2,38ª2áâà2,38ª2áâà3
7700000000029770018
40,42,42ª1,44áâà1,44ª1,44ª2
7700000000029770019
4áâà1,4áâà2,4áâà3,6áâà1,6ª2,6ª2áâà1
7700000000029770020
6ª2áâà3,8ª1,10ª1,10ª2,12,14,16
7700000000029770021
35áâà1,35áâà2,35ª1,35ª1áâà1,37,37áâà2
7700000000029770022
37áâà3,37áâà4,37áâà5,37áâà6,37ª1áâà1
7700000000029770023
37ª1áâà2,41,41áâà1,41áâà2,46,48,50
7700000000029770024
50áâà1,56ª1,56ª1áâà1,56ª1áâà2,56ª2
7700000000029770025
56ª2áâà1,56ª2áâà3
7700000000029770026
4ª1,4ª2,6,6áâà2,6áâà3,6áâà4,6áâà5
7700000000029780001
6áâà8,6áâà9,6áâà10,6áâà20,6áâà24,6áâà25
7700000000029780002
1,2/22,3,3áâà2,3áâà3,6/12,8,8áâà2,12
7700000000029800001
16áâà1,18áâà1,18áâà2,21,21áâà1
7700000000029800002
5/3áâà3,9/11,22,23,23áâà2,24,24áâà2
7700000000029800003
24áâà3,24áâà4,38,38áâà2
7700000000029800004
3,4,5áâà2,6,7,7áâà2,8,10,10áâà3,10áâà4
7700000000029810001
12,12áâà4,12áâà5,12áâà6,12áâà7
7700000000029810002
1,1áâà1,2áâà1,3áâà1,4,4áâà2
7700000000029830001
áâà13,1,2,2áâà2,3,3ª1,4,5,5áâà1,5áâà2
7700000000029840001
6,6áâà1,6áâà2,7,7áâà2,9ª1,9ª2,9ª3
7700000000029840002
7700000000029840003
10áâà6,10áâà7,10áâà9,12áâà1,12áâà2
7700000000029840004
12áâà3,13áâà1,13áâà2,13áâà3,13áâà4
7700000000029840005
7700000000029840006
13áâà10,13áâà11,13,15,15áâà2,15áâà3
7700000000029840007
1áâà6,1áâà8,1áâà9,1áâà13,1áâà14,1áâà15
7700000000029860001
1áâà16,1áâà17,1áâà18,1áâà20,1áâà25
7700000000029860002
7700000000029860003
1áâà34,1áâà35,1áâà37,1áâà39,1áâà40
7700000000029860004
1áâà43,1áâà44,1áâà46,1áâà47,1áâà49
7700000000029860005
1áâà50,1áâà51,1áâà52,1áâà53,1áâà54
7700000000029860006
1áâà55,1áâà57,1áâà58,1ª1,1ª2,1ª3,1ª4
7700000000029860007
1ª5,1ª6,1ª6,1ª7,1ª8,1ª9,1ª10,1ª11
7700000000029860008
1áâà1,1áâà2,1áâà3,2,3,4,5,7,9,11,11
7700000000029860009
1ª1,1ª2,1,1áâà1,1áâà2,1áâà3,1áâà4
7700000000029870001
1áâà5,1áâà6,3ª1,3ª2,3ª2áâà1,3ª2áâà2
7700000000029870002
3,5ª1,5ª2,5,7,7,9,11,11áâà1,11ª1
7700000000029870003
11ª2,11ª2áâà1,13ª1,15
7700000000029870004
7700000000029880001
2áâà1,2áâà2,2áâà3,3ª1,3ª2,3ª2áâà1,4
7700000000029890001
4áâà9,5,6,6,8
7700000000029890002
3,3,4,4áâà2,5áâà4,5áâà5,5ª1,5ª2,5ª3
7700000000029900001
5,6áâà6,6áâà7,6ª1,6ª4,6ª5,7ª1,7ª6,7ª7
7700000000029900002
8,10,13,14
7700000000029900003
4,4,5,6ª1,7ª1,7ª2,8ª1,8ª2,8ª3,8ª4,8,10
7700000000029910001
9áâà9
7700000000029920001
2ª1,3,3áâà2,3áâà3,3áâà4,3áâà7,3áâà8
7700000000029920002
4áâà3,4áâà4,4ª1,4ª2,5,5áâà2,5áâà3
7700000000029920003
5áâà5,6ª1,6ª2,6ª3,6ª3áâà1,6ª3áâà2,8ª1
7700000000029920004
8ª2,8ª3,8ª4,9,9áâà6,9áâà8,9áâà10
7700000000029920005
9áâà19,9áâà20,10ª1,10ª2,10ª3,10ª4,11
7700000000029920006
11áâà2,12ª1,12ª2,12ª3,14ª1,14ª2,14ª3
7700000000029920007
16,17,18ª1,18ª2,18ª3,19,20,20ª2,22
7700000000029920008
24ª1,24ª2,24ª3,26ª1,26ª2,30,32,34áâà3
7700000000029920009
34ª1,34ª1áâà1,34ª2,34ª2áâà1,34ª2áâà2
7700000000029920010
34ª2áâà3,36,38,38áâà1,38áâà2,40,42,44
7700000000029920011
44áâà3,46,48,50,52,54,56,58,60,62,64
7700000000029920012
66,66áâà2,68
7700000000029920013
7700000000029930001
1áâà8,1áâà9,1áâà10,1áâà11,2,2áâà1
7700000000029930002
2áâà4,3,5,6,6áâà1,6áâà2,6ª1,8ª1,8ª2
7700000000029930003
9,9áâà2,9áâà3,9áâà4,9áâà5,9áâà6,10,11
7700000000029930005
11áâà2,12,12áâà3,12áâà4,13,13ª1áâà1
7700000000029930006
14ª1,15,16,16áâà1,16ª1,16ª1áâà1,16,17
7700000000029930007
17áâà2,17áâà9,17áâà10,17áâà14,18
7700000000029930008
19/18ª1,19/18ª2,20,20,21áâà6,21ª1
7700000000029930009
21ª2,21ª4,21/19ª3,22áâà1,22áâà2,22áâà3
7700000000029930010
7700000000029930011
22áâà13,22áâà14,22áâà15,22áâà16
7700000000029930012
22áâà27,23ª1,23ª2,23ª2áâà2,23ª3,23ª4
7700000000029930013
23ª5,23ª5áâà2,23ª6,23,25,25,25áâà2
7700000000029930014
25,27ª1,27ª2,27ª3,27ª3áâà4,29,31,33
7700000000029930015
22áâà28
7700000000029930016
24,28ª1,28ª2,28ª3,34,35,35
7700000000029930017
7700000000029930004
40áâà1
7700000000029930018
32,32áâà3,32áâà89,32áâà90,32áâà91
7700000000029930019
32áâà92,32áâà93,32áâà94,32áâà95
7700000000029930020
32áâà96,32áâà97,32áâà98,32áâà100
7700000000029930021
32áâà101,32áâà102,32áâà103,32áâà104
7700000000029930022
32ª1,32ª2,32ª3,32áâà1,32áâà2
7700000000029930023
32áâà3,32,34áâà2,34áâà3,34áâà4
7700000000029930024
34áâà5,34áâà8,34áâà9,34áâà10,34áâà11
7700000000029930025
34áâà12,34áâà14,34áâà15,34áâà17
7700000000029930026
37áâà3,37ª1,37ª2,39,39ª2,41áâà6,41ª1
7700000000029930027
41ª2,41ª3,41ª4,41ª5,43,43áâà2,45áâà3
7700000000029930028
45ª1,45ª2,47ª1,49ª1,49ª2,51ª1,51ª2
7700000000029930029
51ª3,51ª3áâà4,51ª3áâà5,53,53ª1,53ª2,55
7700000000029930030
55ª1,55ª2,57,57ª1,57ª1áâà3,57,59ª1
7700000000029930031
59ª2,61ª3,63,63áâà2,63áâà3,65,69ª1,69ª2
7700000000029930032
1,1áâà1,1áâà2,1áâà3,1ª2,1,1áâà1
7700000000029940001
121601
1áâà2,1áâà3,1áâà4,2,2áâà2,2,3
7700000000029940002
3áâà2,3ª2,4,4áâà2,5,5ª1,5,6,6,7ª1
7700000000029940003
7ª2,7,8ª1,8ª1áâà1,8ª1áâà2,8ª2,9,9áâà2
7700000000029940004
10,10áâà2,10ª3,10,11,11,12,12áâà2
7700000000029940005
12áâà3,12,13ª1,13ª2,14,15,16,16áâà2
7700000000029940006
17,17,18,19,20,20áâà1,20áâà2,20,21
7700000000029940007
22,23,23áâà3,23ª2,23,24,24áâà5,24áâà6
7700000000029940008
24ª1,24ª2,24ª3,34,34áâà2,34áâà3,35,36
7700000000029940009
36áâà2,37,39,39áâà2,40,41,41áâà2,42
7700000000029940010
46_48áâà14
7700000000029960001
1,1áâà2,1ª1,1,2,2áâà1,3áâà1,4,4áâà2,5
7700000000029960002
5ª1,5ª2,5ª2áâà2,6,7áâà1,7ª1,7ª2,8
7700000000029960003
8áâà1,8áâà2,8ª1,8ª2,9,10,10áâà1,10áâà2
7700000000029960004
11,11áâà2,12ª1,12ª1áâà1,12ª2,13,13ª1
7700000000029960005
14ª1,14ª2,14ª3,14ª3áâà1,14ª3áâà2
7700000000029960006
14ª3áâà3,14ª3áâà4,16ª1,16ª2,16ª2áâà1
7700000000029960007
16ª2áâà2,16ª3,16ª4,16ª5,16ª5áâà1,16ª6
7700000000029960008
7700000000029960009
2/14,2,4,4,4,4áâà1,5,5,6,6
7700000000029970001
6áâà2,6,7,7áâà1,7áâà2,8,8,8,8áâà2
7700000000029970002
8áâà3,9ª1,10,10áâà2,10,11,11,12,12
7700000000029970003
13,14,14ª1,14áâà1,15,17,17ª1
7700000000029970004
2,2áâà1,5,5,7,8,10,10áâà2,10ª1,11,16
7700000000029980001
16áâà2,18,18áâà1,20
7700000000029980002
1,1áâà2,1áâà8,1áâà9,1áâà12,1áâà13
7700000000029990001
1áâà14,1ª1,1ª2,1ª3,1ª4,1ª6,1ª7,1ª8,1ª9
7700000000029990002
1ª10,1ª11,1ª12,2,8,9,11,11,12,14,15
7700000000029990003
16,17,17áâà2,18,19,20,20áâà2,20áâà3,25
7700000000029990004
26,26áâà1,27,31/35,31/35áâà3,31
7700000000029990005
31áâà2,31áâà3,31áâà4,31áâà5,33/44
7700000000029990006
3,4,5áâà1,5áâà2,6áâà1,6áâà3,6áâà4,6ª1
7700000000030000001
6ª1áâà1,7,7,8,9,9áâà2,9ª2,10,10áâà1
7700000000030000002
10áâà2,10áâà3,10áâà4,10áâà5,10áâà1,11
7700000000030000003
12,13,14ª1,14ª2,14ª3,16,16ª2,18,18áâà2
7700000000030000004
3ª,5ª1,5ª2,5ª2áâà2,5ª2áâà3,5ª3
7700000000030010001
5ª4áâà1,5,5áâà1,5,5,7ª1,7ª2,8ª1
7700000000030010002
8ª1áâà2,8ª1áâà3,8ª2,8ª2áâà3,8ª2áâà7
7700000000030010003
8ª3,8ª4,9,9ª,9ªáâà2,9ªáâà3,10
7700000000030010004
12,12ª4,14
7700000000030010005
11,11áâà1,11,13,16,16áâà1,16áâà2,18
7700000000030010006
20,22,22áâà1,22áâà2,22áâà3,22áâà4,24
7700000000030010007
7700000000030010008
3,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000030040001
3áâà6,3áâà7,3áâà14,5,5áâà5,5,6,6
7700000000030040002
6,8
7700000000030040003
4áâà1,4áâà2,4áâà3,5,7,7áâà2,8áâà1
7700000000030050001
8áâà2,8áâà3,8áâà4,8áâà5,8áâà6,8áâà7,9
7700000000030050003
9áâà2,10,10áâà3,10ª2,12
7700000000030050004
7700000000030050002
13,15,17,18,19,19áâà1,20,26,26áâà2
7700000000030060001
10,12,14/37
7700000000030060002
1,1áâà2,3,4,5,5ª1,6,7,9,9áâà2
7700000000030060003
2/1,4,4áâà2,8,10,10,10áâà1
7700000000030070001
14,16áâà3,16ª1,16ª2,18,20,22áâà2,24
7700000000030070002
24áâà2,24áâà3,26,28,28áâà2,30,30áâà1
7700000000030070003
30áâà2,30áâà5,30áâà6,30áâà11,30áâà14
7700000000030070004
30áâà19,30áâà20,30áâà21,30áâà23
7700000000030070005
30áâà15,30áâà16,30áâà17,30áâà18
7700000000030070006
30áâà24,30áâà25,30áâà27,30áâà46
7700000000030070007
30áâà57,30áâà58,32,32áâà1,32áâà2,34
7700000000030070008
36/2,36/2áâà2
7700000000030070009
12,38áâà2,38/1,40,42,44áâà1,44áâà2,46
7700000000030070011
48,50,52,54
7700000000030070012
1/5,2/7áâà1,3,5,6,7,8,8áâà2,9/12,10
7700000000030090001
12áâà1,12áâà2,13áâà5,13áâà6,13áâà7
7700000000030090002
13áâà8,13áâà9,13áâà29,14áâà4,15,15áâà2
7700000000030090003
15áâà3,16áâà1,16áâà3,17ª1,18,20,22áâà1
7700000000030090004
7700000000030090005
2/30,6,6áâà2,11_13,12_14áâà1,12_14áâà2
7700000000030110001
12_14áâà3,12_14áâà4,12_14áâà5,12_14áâà9
7700000000030110002
19áâà1,24/30áâà1
7700000000030110003
1,1ª1,1,3,3áâà6,3ª1,5,5ª1,5ª2,9,9áâà1
7700000000030130001
9áâà2,9áâà3,9áâà4,9ª1,11,18,18ª2
7700000000030130002
8,8áâà1,8ª1,10
7700000000030130003
15,15áâà2
7700000000030130004
19,23/16áâà4,24,24ª1,24ª2,26,26áâà2
7700000000030130005
7700000000030130006
2,2áâà3,4ª1,4ª2,4ª2áâà1,6,6,7,7ª1
7700000000030140001
7ª2,7ª3,7ª4,7ª4áâà1,7ª5,8,9ª1,9ª2
7700000000030140002
9ª3,9ª4,10ª1,10ª2,11,11,12ª1,13
7700000000030140003
14áâà6,14ª1,14ª2,14ª3,14ª4,14ª4áâà1
7700000000030140004
14ª5,15,15áâà1,16,17,17áâà1,18,18áâà2
7700000000030140005
19,19áâà2,20,20áâà1
7700000000030140006
4áâà1,4áâà2,5_7áâà1,5_7áâà2,8áâà1
7700000000030170001
8áâà2,9
7700000000030170003
7700000000030170002
12,13áâà1,13áâà11,13áâà10,14,16_18
7700000000030170004
19áâà1,20/2,21áâà1,21áâà2,21áâà3
7700000000030170005
21áâà4,21áâà5,22/1,24áâà1,24áâà1
7700000000030170006
24áâà2,24áâà3,24áâà11,24áâà12,24áâà13
7700000000030170007
24áâà14,24áâà15,24áâà16,24,25
7700000000030170008
1ª1,1ª1,1ª2,1ª2áâà2,1ª3,1ª4,1ª4áâà8
7700000000030180001
1ª5,1ª5áâà3,1ª6,1,1,3ª1,3ª2,3ª3,3ª4
7700000000030180002
3ª5,3ª6,3ª7,3ª8,3ª8áâà2,3ª8áâà3,3
7700000000030180003
2,2,4ª1,4ª1áâà2,4ª1áâà3,4ª1áâà4,4ª2
7700000000030180004
4ª3,8ª1,8ª2,8ª2áâà2,8ª2áâà3
7700000000030180005
1ª1,1ª2,1ª2áâà2,1ª2áâà3,1ª3,1áâà1
7700000000030190001
1áâà2,1áâà4,1ª1,1ª4,2,2áâà2,2áâà3
7700000000030190002
7700000000030190003
2ª1áâà1,2,3,3áâà2,3áâà3,3áâà4
7700000000030190004
3áâà5,3áâà6,4ª1,5ª1,5ª3,5,5áâà1
7700000000030190005
5áâà2,7ª1,7ª1,7ª1áâà2,7ª2,7ª2áâà2
7700000000030190006
7ª3,7,7,9ª1,9ª2,9ª3,9,9,9,9,11ª2
7700000000030190007
11ª3,11ª3áâà2,11ª3áâà4,11ª4,11
7700000000030190008
16,18,18áâà1,18,18,20,20,20,20
7700000000030200001
20,22
7700000000030200002
2,2áâà1,2,3,3áâà2,4,5,6,6ª2,6ª3,7
7700000000030200003
7áâà1,7,8ª1,8ª2,8ª2,8ª3,8ª4,8ª4,8ª5
7700000000030200004
8ª6,10áâà1,10áâà2,12ª1,12ª2,12ª2áâà2
7700000000030200005
12ª2áâà3,12ª3,12,13,13áâà1,14áâà1
7700000000030200006
14áâà2,14áâà3,14áâà4,15,17
7700000000030200007
2,4ª1,4ª2,4ª3,4ª4,10,10áâà2
7700000000030210001
1,1áâà2,3,3ª2,3ª2áâà2,5/12,7ª2,7/11ª1
7700000000030210002
9,9áâà1,9áâà3
7700000000030210003
13áâà5
7700000000030230001
3áâà1,3áâà2,5,6áâà1,6áâà3,6/6áâà2
7700000000030230002
11áâà1,11áâà2,11,11áâà2,12áâà1
7700000000030230003
12áâà2,12áâà4,12áâà5,13áâà4
7700000000030230004
8áâà1,8áâà2,10ª1,10ª2,12
7700000000030240001
20ª1,20ª2,20ª3,20ª3áâà1,20ª4,20áâà1
7700000000030250001
20áâà2,22áâà1,22ª1,22ª2,24,26ª1,26ª2
7700000000030250002
26ª2áâà2,28,30ª1,30ª2,30ª3,32ª1,32ª2
7700000000030250003
34ª1,36,36ª1,36ª2,36ª2áâà2,36ª3,36ª4
7700000000030250004
36ª5,36ª5áâà2,38
7700000000030250005
13,13áâà1,15,15áâà1,17,17,19,21,23,25
7700000000030250006
27,29,29áâà1,31,31áâà1,33,35,35áâà2
7700000000030250007
35,35áâà1,35áâà1,37,39,39áâà1,41
7700000000030250008
41áâà1,41,41áâà3
7700000000030250009
1,2,3,4,4áâà1,4áâà2,5,5ª1,5ª2,6,7ª1
7700000000030250010
7ª2,7ª2áâà1,7ª2áâà2,7ª3,7ª4,8,9ª1,9ª2
7700000000030250011
9ª2áâà2,10ª1,10ª2,12ª1,12ª2,12ª3,12ª4
7700000000030250012
12ª5,12ª5áâà1,12ª5áâà2,14,14áâà1
7700000000030250013
7700000000030260001
1áâà7,1áâà8,1áâà16,1áâà1,2,2áâà2
7700000000030260002
7700000000030260003
3áâà7,3áâà8,3áâà10,3áâà11,3áâà12
7700000000030260004
3áâà14,3áâà15,3áâà17,3,3áâà1,5,6
7700000000030260005
6áâà1,6ª1,6ª1áâà2,6ª1áâà3,7,8,8ª1,10
7700000000030260006
10áâà2,12,14,14áâà1,14áâà2,14ª1,16,20
7700000000030260007
22áâà7,22áâà8,26,28,30ª1,30ª2,32
7700000000030260008
16áâà6,16ª1,16ª1áâà1,16ª2,16ª3
7700000000030280001
16ª3áâà1,16ª4,16ª4áâà2,16ª5
7700000000030280005
19ª1,19ª1áâà6,19ª2,19ª3,21,21áâà1
7700000000030280002
21áâà2,23
7700000000030280003
4,4áâà1,4áâà2,4áâà3,4áâà4,6,8,10áâà1
7700000000030280004
7700000000030280006
10áâà7,10áâà8,10áâà9,10,10áâà1
7700000000030280007
7700000000030280008
10áâà6,10áâà7,10áâà8,14ª1,16
7700000000030280009
7700000000030280010
7700000000030280011
16áâà9,16áâà10,16áâà11,16áâà12
7700000000030280012
1,1,1áâà1,2/7áâà1,2/7áâà3,2/7áâà4
7700000000030290001
2/7áâà5,2/7áâà6,2/7áâà7,2/7áâà8
7700000000030290002
2/7áâà11,2/7áâà12,2/7áâà13,2/7áâà14
7700000000030290003
2/7áâà17,2/7áâà18,2/7áâà19,2/7áâà19
7700000000030290004
2/7áâà20,2/7áâà21,2/7áâà22,2/7áâà24
7700000000030290005
2/7áâà25,2/7áâà26,2/7áâà27,2/7áâà28
7700000000030290006
2/7áâà29,2/7áâà30,2/7áâà31,2/7áâà33
7700000000030290007
2/7áâà35,2/7áâà37,2/7áâà38,2/7áâà39
7700000000030290008
2/7áâà40,2/7áâà41,2/7áâà42,2/7áâà42
7700000000030290009
2/7áâà43,2/7áâà44,2/7áâà45,2/7áâà45
7700000000030290010
2/7áâà46,2/7áâà46,2/7áâà46,2/7áâà46
7700000000030290011
2/7áâà48,2/7áâà49,2/7áâà51,2/7áâà52
7700000000030290012
3ª1,3ª2,3ª2áâà1,3ª3,5áâà3,5áâà4,5ª1
7700000000030290013
5ª1áâà1,5ª1áâà2,5ª2,7ª1,7ª2,9ª1,9ª2
7700000000030290014
11áâà4,11ª1,11ª2,11ª3,13,13ª1,13ª2
7700000000030290015
13ª3,13ª5,15áâà4,15ª1,15ª1áâà2,15ª2
7700000000030290016
15ª3,17ª1,17ª2,17ª3,17,19áâà4,19ª1
7700000000030290017
19ª2,19ª3,21ª1,21ª2,23,23áâà3
7700000000030290018
2,4áâà1,4áâà2,4ª2,7áâà2,7áâà3,7ª2,7ª3
7700000000030300001
7700000000030310001
2/3áâà5,2/3áâà6,6,6áâà2,6,8,10,14,18
7700000000030310002
20/3áâà1,22áâà1,24,26,26áâà2,28áâà1
7700000000030310003
7700000000030310004
3,9,15áâà1,15áâà2,15áâà3,19,19áâà1,19
7700000000030310005
19,21áâà1,21áâà2,21áâà3
7700000000030310006
3áâà1,3áâà4,3áâà5,3áâà10,4
7700000000030320001
3ª1,3ª1áâà1,3ª1,3ª2,3ª2,3ª3,6,6áâà1
7700000000030350001
6áâà2,7,15,18,18áâà1,20,22áâà1,22áâà2
7700000000030350002
22áâà3,22áâà3,22áâà10,24áâà334,24ª1
7700000000030350003
7700000000030360001
7700000000030360002
2áâà18,2áâà22,2áâà23,2áâà25,2áâà26
7700000000030360003
7700000000030360004
3áâà7,3áâà9,3áâà11,3áâà12,3áâà13
7700000000030360005
7700000000030360006
3áâà19,3áâà20,3áâà21,4,4áâà2,5áâà1
7700000000030360007
5áâà2,5áâà3,5áâà7,5áâà8,6,8,10áâà1
7700000000030360008
10áâà2,10áâà1,10áâà2,10áâà3,10áâà4
7700000000030360010
10áâà5,12áâà1,12áâà2,12áâà3
7700000000030360011
12áâà4,12áâà5,12áâà6,14,16,16áâà3
7700000000030360012
1,1áâà1,1áâà2,2,2ª1,2ª1áâà2,2ª2
7700000000030370001
2ª2áâà1,2ª2áâà2,2ª3,3,3áâà1,3áâà2,4,5
7700000000030370002
5áâà1,6ª1,6ª2,6ª2áâà2,7,7áâà1,8,8áâà1
7700000000030370003
8ª2,8
7700000000030370004
1,1ª1,1ª1áâà2,1ª1áâà3,2,2áâà2,2áâà3
7700000000030380001
2áâà4,2áâà8,3,3áâà2,3áâà4,3áâà5,3áâà6
7700000000030380002
3áâà7,3áâà8,3áâà9,3áâà10,3ª1,3ª1áâà2
7700000000030380003
3ª1áâà3,3ª1áâà4,3ª1áâà5,3ª1áâà6
7700000000030380004
3ª1áâà8,3ª1áâà10,3ª1áâà11,3ª1áâà12
7700000000030380005
3ª1áâà13,3ª1áâà15,3ª1áâà16,3ª1áâà17,3
7700000000030380006
3áâà2,3áâà3,4,6
7700000000030380007
4ª1,4ª2,5_7áâà2,5_7áâà3,5_7áâà4
7700000000030400001
5_7áâà5,5_7áâà6,5_7áâà7,5_7áâà8
7700000000030400002
5_7áâà9,5_7áâà10,5_7áâà11,5_7áâà13
7700000000030400003
5_7áâà14,5_7áâà15,5áâà1,6áâà3,6áâà5
7700000000030400004
7áâà1,10áâà1
7700000000030400005
2/6,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000030410001
4áâà6,4áâà7,4áâà8,4áâà10,4áâà11,4áâà20,6
7700000000030410002
5ª1,5ª1áâà1,5ª2,5ª2áâà1,5,6,7,7áâà1
7700000000030430001
7700000000030430002
7áâà8,7áâà9,7áâà10,7áâà11,7áâà12
7700000000030430003
7700000000030430004
7700000000030430005
7áâà23,7áâà24,7áâà25,7áâà27,7áâà28
7700000000030430006
7áâà29,7áâà30,7áâà32,7áâà33,7áâà34,7ª1
7700000000030430007
9ª1áâà1,11,11áâà3,12,12áâà2,12áâà3
7700000000030430008
12áâà4,12áâà5,12,12,13,13áâà1,13ª1
7700000000030430009
13ª2,14,14áâà5,14áâà97,14ª2,14ª2áâà2
7700000000030430010
14ª2áâà3,14ª2áâà6,14ª2áâà19,14ª2áâà20
7700000000030430011
14ª2áâà21,14ª2áâà22,14ª2áâà23
7700000000030430012
14ª2áâà24,14ª2áâà25,14ª2áâà26
7700000000030430013
14ª2áâà27,14ª2áâà28,14ª2áâà29
7700000000030430014
14ª2áâà30,16ª1áâà1,16ª1áâà2,16ª2
7700000000030430015
16ª2áâà1,16ª2áâà2,16ª2áâà3,16ª2áâà4
7700000000030430016
17áâà2,17ª1,17ª2,17ª2áâà1,17ª2áâà2
7700000000030430017
17ª2áâà3,17ª2áâà6,17ª2áâà13,18,18ª1
7700000000030430018
18ª2,18ª3,19ª2,19ª2áâà1,19ª2áâà2
7700000000030430019
19ª2áâà12,19ª3áâà1,19ª3áâà2,19ª3áâà3
7700000000030430020
19ª3áâà4,19ª3áâà5,20,20áâà1,20ª1
7700000000030430021
21ª1áâà1,24áâà1
7700000000030430022
7700000000030430023
1áâà1,2/17,3ª1,3ª2,3áâà1,3áâà2,4ª1
7700000000030440001
4ª2,4ª3,5,5ª1,5ª2,6,6,6áâà1,6áâà2
7700000000030440002
6áâà5,6ª3,6ª3áâà2,6ª4,6ª6,6ª7
7700000000030440003
6ª8,8áâà1,8áâà2,10áâà3,10ª1,10ª2,12ª1
7700000000030440004
12ª2,12ª3,14ª1,14ª2,14ª3,14ª3áâà1,16ª1
7700000000030440005
3,3áâà2,3,5,7áâà1,7áâà1,7áâà2,7áâà3
7700000000030450001
7áâà4,7áâà5,7áâà6,7áâà8,7áâà9,7áâà10
7700000000030450002
7700000000030450003
7áâà16,7áâà17,7áâà17,7áâà18,7áâà20
7700000000030450004
7áâà21,7áâà23,7áâà25,7áâà26,7áâà27
7700000000030450005
7áâà28,7áâà29,7áâà37,7áâà40,7áâà50,7ª1
7700000000030450006
7,7,9áâà2,9áâà3,9áâà5,9áâà6,9áâà8
7700000000030450007
1áâà1,1áâà2,1ª3,1áâà1,1áâà2,1áâà3,2
7700000000030460001
3,3,3áâà1,3áâà2,3áâà3,3áâà4
7700000000030460002
3áâà5,3áâà6,3áâà7,3áâà9,3áâà15
7700000000030460003
3áâà17,3áâà18,3áâà20,3áâà21
7700000000030460004
3áâà22,3áâà23,3áâà28,3áâà32
7700000000030460005
3áâà33,3áâà36,3áâà37,3áâà38
7700000000030460006
3áâà39,3áâà40,3áâà42,3áâà44
7700000000030460007
3áâà73,3áâà90,3áâà100,3áâà101
7700000000030460008
7700000000030460009
5áâà10,8,10
7700000000030460010
7,7áâà2
7700000000030480001
1,1áâà2,1áâà3,1áâà4,1áâà1,3,5áâà3,5ª1
7700000000030490001
5ª2,7áâà1,7áâà2,9,10áâà1,11,13ª3,13ª1
7700000000030490002
13ª2,13ª3,15,17,19,19áâà2,20áâà1,21
7700000000030490003
21áâà4,21,21áâà2,22,22áâà2,22áâà3
7700000000030490004
23ª1,23ª2,24,24áâà2,25áâà1,25áâà2
7700000000030490005
25áâà3,25áâà4,25áâà5,25áâà6,25áâà9
7700000000030490006
25áâà10,25áâà12,25áâà13,25áâà14
7700000000030490007
25áâà15,25áâà16,25áâà17,25áâà19
7700000000030490008
7700000000030490009
7700000000030490010
25áâà28,25áâà29,25áâà30,25áâà35
7700000000030490011
25áâà36,25áâà37,25áâà38,27,32áâà3,32ª1
7700000000030490012
32ª2,32,32áâà5,32áâà23,32áâà26
7700000000030490013
32áâà27,32áâà29,33/1áâà1,33/1áâà2
7700000000030490014
33/1áâà3,33/1áâà4,33/1áâà6,33/1áâà7
7700000000030490015
33/1áâà10,33/1áâà12,33/1áâà13
7700000000030490016
7700000000030490017
33/1áâà22,33/1áâà23,33/1áâà24
7700000000030490018
33/1áâà25,33/1áâà26,33/1áâà27
7700000000030490019
33/1áâà28,34,34áâà1,34áâà5,34áâà1
7700000000030490020
35,35ª1,35ª1áâà4,35ª2,35áâà1,36,36
7700000000030490021
38áâà7,38áâà16,38áâà17,38áâà142
7700000000030490022
37,38,38áâà2,38áâà3,38áâà4,38áâà5
7700000000030490023
38áâà145,38ª1,38ª1áâà3,38ª138,38ª139
7700000000030490024
38,38,38áâà2,38áâà3,38áâà4
7700000000030490025
38áâà5,38áâà6,38áâà7,38áâà8
7700000000030490026
38áâà12,38áâà13,38áâà14,38áâà15
7700000000030490027
38áâà15,38áâà16,38áâà17,38áâà18
7700000000030490028
38áâà19,38áâà21,38áâà25,38áâà33
7700000000030490029
38áâà34,38áâà38,38áâà42,38áâà43
7700000000030490030
38áâà44,38áâà47,38áâà48,38áâà49
7700000000030490031
38áâà50,38áâà51,38,38áâà1,38áâà2
7700000000030490032
38áâà3,38áâà4,38áâà1,38áâà2,40
7700000000030490033
40áâà2,40áâà3,40áâà4,40áâà5
7700000000030490034
40áâà6,40áâà7,40áâà8,40áâà9
7700000000030490035
40áâà10,40áâà11,40áâà12,40áâà13
7700000000030490036
40áâà15,40áâà16,40áâà18,40áâà19
7700000000030490037
40áâà20,40áâà21,40áâà22,40áâà23,42
7700000000030490038
42,46,48,48áâà2,50áâà2,50áâà3,50ª1
7700000000030490039
50ª2,50ª3,50ª3áâà3,52,52ª1,52ª2
7700000000030490040
52ª2áâà2,54,56,58,58áâà2,60,60,62
7700000000030490041
62áâà2,64ª1,64ª1áâà2,64ª1áâà3,64ª2
7700000000030490042
64áâà1,64áâà2,66,68,68ª1,68ª4
7700000000030490043
68ª4áâà1,68ª4áâà2,68ª5,68,70áâà2
7700000000030490044
70áâà3,70ª1,70ª3,72ª1,72ª3,72ª4
7700000000030490045
72áâà1,74ª3,74ª3áâà2,76ª4,76ª5,76
7700000000030490046
76áâà1,76áâà2,76áâà3,76áâà4
7700000000030490047
76áâà5,76áâà6,76áâà19,76,76,78
7700000000030490048
78áâà2,78,80,80áâà1,82,82áâà2,82áâà3
7700000000030490049
82ª1,82ª2,82ª7,82ª7áâà2,82ª8,82ª9
7700000000030490050
82ª10,82ª11,84ª1,84ª2,84ª2áâà2,84ª3
7700000000030490051
84ª4,84ª5,84ª6,86,86áâà2,86áâà6
7700000000030490052
39,39áâà1,39áâà1,39áâà1,39áâà2
7700000000030490053
39áâà3,39áâà4,39áâà5,39áâà8,39áâà10
7700000000030490054
39áâà12,39áâà13,39áâà14,39áâà17
7700000000030490055
39áâà18,39áâà19,39áâà20,39áâà21
7700000000030490056
39áâà23,39áâà25,39áâà26,39áâà27,39ª1
7700000000030490057
39ª2,39,39áâà1,39áâà2,39áâà3
7700000000030490058
39áâà4,39áâà5,39áâà6,39áâà7
7700000000030490059
39áâà9,39áâà10,39áâà11,39áâà12
7700000000030490060
39áâà13,39,39áâà1,39áâà2,39áâà3
7700000000030490061
39áâà4,39áâà5,41ª,41ª,41ªáâà11,43
7700000000030490062
43ª,43ª,43ª,43áâà1,43áâà2,43áâà3
7700000000030490063
43áâà4,43áâà5,43áâà6,43áâà7,43áâà8
7700000000030490064
43áâà9,43áâà1,43áâà2,43áâà3,43áâà4
7700000000030490065
43áâà6,43áâà7,43áâà8,43áâà9
7700000000030490066
43áâà10,86áâà5,88,88áâà1,90,92,92áâà3
7700000000030490067
7700000000030490068
14,16,16áâà1,16áâà2,20áâà1
7700000000030490069
áâà2
7700000000030500001
3áâà1,3áâà3,3áâà4,7_9áâà1,7_9áâà2
7700000000030520001
7_9áâà7,7_9áâà18
7700000000030520002
7_9áâà3,7_9áâà4,7_9áâà5,7_9áâà6
7700000000030520003
2/1áâà1,4áâà1,4áâà2,6áâà2,6áâà3,10áâà1
7700000000030520004
7700000000030520005
10áâà8,10áâà13,11áâà1,11áâà2,11áâà3
7700000000030520006
13áâà1,13áâà2,14áâà2,14áâà3,14áâà5,15
7700000000030520007
1,20
7700000000030530001
2,5,5áâà1,7/1ª1,7áâà1,9,9áâà2,9áâà3
7700000000030530002
9áâà4,9áâà5,9áâà6,24,24áâà1,24áâà2
7700000000030530003
36áâà1,36áâà3,36áâà5,36áâà10,38,38áâà1
7700000000030530004
40,45,45áâà1
7700000000030530005
3áâà1,3áâà2,3áâà3,5áâà1,5áâà2,5áâà3
7700000000030540001
2ª1,2ª2,2ª3,3,3áâà2,3áâà3,4ª1,5,5,7,8
7700000000030550001
8áâà2,8ª1,8ª2,8ª3,8,10áâà3,10ª2,10ª3
7700000000030550002
14,16/26ª1,16/26ª2,16/26ª3,16/26ª4
7700000000030550003
16/26ª5,16/26ª6
7700000000030550004
34,34áâà1,34áâà2,34áâà3,34áâà5,34áâà6
7700000000030560001
34áâà7,34áâà8,34áâà12,34áâà13,34áâà15
7700000000030560002
34áâà17,34áâà20,34áâà26,38,38áâà1
7700000000030560003
38áâà2,38áâà3,38áâà4,38áâà6
7700000000030560004
38áâà7,38áâà8,38áâà9,38áâà10
7700000000030560005
38áâà11,38áâà15,38áâà16,38áâà22
7700000000030560006
38áâà23,38áâà24,38áâà25,38áâà26
7700000000030560007
38áâà27,38áâà28,38áâà29,38áâà30
7700000000030560008
38áâà31,38áâà33,38áâà35,38áâà36
7700000000030560009
38áâà48,38áâà55,38áâà56,38áâà57
7700000000030560010
38áâà37,38áâà39,38áâà40,38áâà42
7700000000030560011
38áâà58,38áâà59,38áâà60,40,40áâà2
7700000000030560012
40áâà3,40áâà4
7700000000030560013
31,31,31áâà2,31áâà2,31áâà3
7700000000030560016
31áâà4,31áâà5,31áâà6,31áâà8
7700000000030560017
6/14ª1,6/14ª2,6/14ª3,9,11,11áâà2,15
7700000000030560019
7700000000030570001
4/13
7700000000030580001
7700000000030600001
1áâà1,3,3áâà3,5áâà1,5áâà2,5áâà3,7
7700000000030620001
7áâà2,7áâà3,7ª2,7ª2
7700000000030620002
4ª1,4ª2,6,6áâà1,8,9áâà1,9áâà2,10,11,12
7700000000030620003
14,14áâà4
7700000000030620004
2,2áâà1,3áâà1,3áâà2,3áâà3,4,4áâà2
7700000000030640001
4áâà3,4áâà4,4ª1,5,5áâà1,6,6áâà8,7,8
7700000000030640002
8áâà2,8áâà3,8áâà6,9áâà1,11áâà1,11áâà2
7700000000030640003
13,13áâà1,13áâà1,13áâà2,13áâà3
7700000000030640004
13áâà4,13áâà5,15,17
7700000000030640005
2,2áâà1,4,6,9,12,13,17,19,24,24
7700000000030650001
1/5,4,6áâà2,6áâà3,8/9,9áâà2,9áâà3,11
7700000000030680001
13áâà2,13áâà3,21,21áâà29,21áâà31
7700000000030680002
21áâà32,21áâà33,21áâà34,22áâà1
7700000000030680003
3áâà1,3áâà2,3áâà3,3áâà4,4,5,6,6áâà1,9
7700000000030700001
11,15áâà1
7700000000030700002
1,1áâà1,2,3áâà1,3áâà2,3áâà3,5,7áâà1
7700000000030710001
7áâà2,7áâà4,10,14,16,16,18,20,22,24
7700000000030710002
24,26,26,28,28,30
7700000000030710003
1áâà6,1áâà13,1áâà15,1áâà16,1áâà17
7700000000030720001
1áâà18,1áâà19,1áâà20,1áâà21,1ª15
7700000000030720002
1áâà1,1áâà2,3,3áâà1,4,5,5,5áâà1
7700000000030720003
5áâà2,5áâà3,6,6áâà1,7,7ª1,7ª2
7700000000030720004
7ª2áâà1,8,8áâà1,8áâà2,8ª1,8,9,9áâà1
7700000000030720005
10áâà1,10ª1,10ª2,10ª3,10ª4,11ª1,11ª2
7700000000030720006
11ª3,12ª1,12ª2,12ª3,12ª4,12ª5,12ª5áâà1
7700000000030720007
12ª6,13,13áâà1,14,14áâà1,14,14,15ª1
7700000000030720008
15ª2,15ª2áâà1,15ª3,16ª1,16ª2,16ª3,17
7700000000030720009
18ª1,18ª1áâà2,18ª2,18ª2áâà1,20ª1,20ª2
7700000000030720010
22ª1,22ª1áâà1,22ª2,22,24ª2,26ª2,28
7700000000030720011
28_,28,28,30/63,30/63áâà1
7700000000030720012
4,6,6áâà2,6áâà3,8,10/2
7700000000030750001
1áâà1,3
7700000000030750002
12,12áâà1,12ª1,12ª2,12ª3,12ª4,14,16,18/1
7700000000030750003
1/12áâà1,1/12áâà2,1áâà1,3áâà1,3áâà2
7700000000030760001
3áâà3,3áâà4,3áâà5,3áâà6,3áâà7,6,8áâà1
7700000000030760002
8áâà8,9áâà1,9áâà3,10,11,12áâà1,12áâà2
7700000000030760003
15áâà5,16,16áâà1,16áâà2,17,20áâà1
7700000000030760004
7700000000030760005
20áâà7,20áâà7,20áâà8,20áâà9,20áâà10
7700000000030760006
22/33áâà1,22/33áâà2
7700000000030760007
1/13áâà2,3,9,9,10/1,11,11áâà2,11áâà4
7700000000030770001
11áâà11,11áâà15,12,13,13áâà2,14,14áâà2
7700000000030770002
15,16áâà1,16áâà2,16áâà3,16áâà5,16áâà6
7700000000030770003
16áâà7,16áâà9,16áâà14,16áâà17,16áâà18
7700000000030770004
16áâà19,16áâà21,16áâà22,17,17áâà2
7700000000030770005
17áâà3,18,18áâà2,19,19áâà1
7700000000030770006
19,19áâà2,20áâà1,20áâà2,20áâà3
7700000000030770007
20áâà6,20áâà7,20áâà11,21,21,22/2áâà1
7700000000030770008
22/2áâà2,22/2áâà3,23áâà1,23/8áâà2
7700000000030770009
23/8ª1,23,24,24áâà2,24áâà3,24áâà5
7700000000030770010
24áâà6,24áâà7,24áâà8,24áâà9,24áâà12
7700000000030770011
24áâà14,24áâà15,25ª2,25ª2áâà2,25ª2áâà3
7700000000030770012
26,27/12,28,28áâà10,28áâà11,28áâà13
7700000000030770013
28áâà14,28áâà15,28áâà16,28áâà17
7700000000030770014
28áâà18,28áâà21,28áâà34,28áâà35
7700000000030770015
28áâà52,28áâà53,28áâà54,28áâà55
7700000000030770016
28áâà56,28áâà57,28áâà58,28ª1,28ª2,28ª3
7700000000030770017
28ª4,28ª8,28ª12,28ª19,28ª20,28ª23
7700000000030770018
28ª30,28ª32,28ª33,28ª40,28ª51,28ª52,30
7700000000030770019
30áâà2
7700000000030770020
2áâà1,4ª1,4ª2,5,5,5,6ª1,6ª2,6ª2áâà2
7700000000030770021
6ª3,6ª3áâà1,6ª3áâà2,6ª3áâà3,6ª3áâà4
7700000000030770022
6ª3áâà5,6ª3áâà6,6ª3áâà7,6ª3áâà8
7700000000030770023
6ª3áâà10,6ª3áâà11,7ª1,7ª1áâà1,7ª2,8
7700000000030770024
2,2,3,3ª1,3ª2,3áâà1,4,4,4áâà2,5
7700000000030780001
5áâà1,5áâà2,5áâà3,6,6,7,8ª1
7700000000030780002
8ª1áâà1,8ª1áâà2,8ª2,8ª2áâà1,8ª2áâà2
7700000000030780003
8ª3,8,8,8,9,10,10áâà1,10áâà2,10áâà3
7700000000030780004
10,10,12/19
7700000000030780005
2,2áâà1,2áâà2,4áâà1,4áâà2,6áâà2,6ª1
7700000000030790001
6ª2,8,9,9áâà1,10ª1,10ª2,11,11áâà1,12
7700000000030790002
12ª1,13,13áâà1,14ª1,14ª2,14ª2áâà1,16,18
7700000000030790003
2,2áâà2,2áâà3,3,3áâà2,4ª1,4ª2,5,5,6
7700000000030800001
7,7áâà3,7,8,8áâà1,8áâà2,9,10ª1,10ª2
7700000000030800002
11áâà5,11ª1,11ª2,11ª3,11ª4,12áâà3,12ª1
7700000000030800003
12ª2,13,14,14áâà1,14áâà3,15,15áâà1
7700000000030800004
15áâà3,15áâà4,16áâà3,16ª1,16ª2,17
7700000000030800005
17áâà1,18áâà3,18ª1,18ª2,19áâà2,19ª1
7700000000030800006
19ª2,19ª3,19ª4,20,21,21áâà2,22ª1,22ª2
7700000000030800007
23áâà3,23ª1,23ª2,24ª1,24ª2,24ª3,24ª3
7700000000030800008
25,25áâà1,26,26,27ª1,27ª2,27ª2áâà1,29
7700000000030800009
29áâà2
7700000000030800010
20ª1,20ª2,20ª3,20ª3áâà1,20ª3áâà2,20ª4
7700000000030810001
20ª4áâà1,20ª4áâà2,22,24áâà1,24ª1,24ª2
7700000000030810002
24ª2áâà1,24ª3,24ª3áâà1,26,26ª1
7700000000030810003
26ª1áâà1,26ª1áâà2,26ª2,26ª3,26ª4
7700000000030810004
26ª4áâà1,28áâà4,28áâà5,28áâà6,28áâà6
7700000000030810005
28áâà7,28áâà7,28áâà11,28áâà11,30ª1
7700000000030810006
30ª2,32ª1,32ª2,34,34ª1,34ª2,34ª3,36ª1
7700000000030810007
36ª2,36ª3,36ª3áâà1,36ª3áâà2,38,40ª1
7700000000030810008
40ª2,40ª3,40ª3áâà1,42ª1,42ª2
7700000000030810009
21,23,23áâà2,23áâà3,25áâà1,25áâà2
7700000000030810010
25áâà2,25áâà3,25áâà4,25áâà5,25áâà6
7700000000030810011
7700000000030810012
25áâà12,25áâà12,25áâà14,25áâà15
7700000000030810013
25áâà15,25áâà17,25áâà18,25áâà19
7700000000030810014
25áâà20,25áâà22,25áâà23,25áâà24
7700000000030810015
25áâà25,25áâà26,25áâà27,25áâà28
7700000000030810016
25áâà29,25áâà30,25áâà35,25áâà39
7700000000030810017
25áâà40,25áâà42,25áâà43,25áâà46
7700000000030810018
25áâà47,25áâà48,25áâà60,25áâà61
7700000000030810019
25áâà62,25áâà63,25áâà64,25áâà70
7700000000030810020
25áâà71,25áâà72,25áâà73,25áâà74
7700000000030810021
25áâà75,25áâà77,25áâà90,25áâà91
7700000000030810022
25áâà97,25áâà100,25áâà101,25áâà102
7700000000030810023
25áâà103,25áâà104,25áâà105,25áâà106
7700000000030810024
25áâà107,25áâà108,25áâà111,25áâà112
7700000000030810025
25áâà113,25áâà114,25áâà115,25áâà119
7700000000030810026
25áâà120,25áâà121,25áâà138,25áâà139
7700000000030810027
25áâà140,25áâà143,25áâà151,25áâà152
7700000000030810028
25áâà153,25áâà153,25áâà173,25áâà174
7700000000030810029
25áâà180,25ª1,25ª2,25ª3,25ª4,25ª5,25
7700000000030810030
25áâà1,25áâà2,25áâà3,25áâà4
7700000000030810031
25áâà5,25áâà6,25áâà7
7700000000030810032
6ª1,6ª2,6ª3,6,6áâà2,8ª1,10ª1,10ª2
7700000000030810034
10ª2áâà1,10ª2áâà2,12ª1,14ª1,14ª2,14
7700000000030810035
16,18ª1,18ª2,18ª2áâà1
7700000000030810036
1,1áâà1,1áâà11,1,1áâà1,3áâà1,3ª1,3ª2
7700000000030810037
5,5ª1,7,7,9ª2,9ª3,11áâà2,11ª1,11ª2
7700000000030810038
11ª3,11ª3áâà1,11ª3áâà2,11ª3áâà3,13áâà1
7700000000030810039
7700000000030810041
13áâà7,13áâà9,13áâà10,13,15ª1,15ª2
7700000000030810042
15ª3,15ª4,15,17,17áâà2,17áâà3
7700000000030810043
17áâà5,17áâà6,17ª1,17ª2,19ª1,19ª2
7700000000030810044
19ª3,19ª4,19ª5,19
7700000000030810045
2ª1,2ª1áâà1,2ª1áâà2,2ª2,2ª3,2ª4,2ª5
7700000000030810046
2ª5áâà1,2ª6,2áâà1,2áâà2,2áâà3,4
7700000000030810047
3ª1,3ª2,3ª2áâà1,5,5,5áâà1,5áâà2
7700000000030820001
7700000000030830001
7700000000030830002
7700000000030830003
7700000000030830004
15áâà17,15áâà24,15áâà25,15áâà26
7700000000030830005
15áâà29,15áâà34,15áâà47,15áâà48
7700000000030830006
15áâà49,15áâà50,15áâà54
7700000000030830007
1áâà2,3,3áâà2,5/14,5/14áâà2,7,9/17
7700000000030840001
9/17áâà2,11áâà1,11/20,11/20áâà2,13,15
7700000000030840002
15áâà1,15,17
7700000000030840003
áâà1,áâà3,áâà4,áâà5,áâà8,áâà9,4,4áâà1
7700000000030840004
4áâà2,4ª1,4ª1áâà1,4ª2,4,6,6,6,8,8
7700000000030840005
10,10áâà2,10,12,12,14,14,14,16,18
7700000000030840006
18áâà1,18áâà2,18áâà3,20,22,24,24áâà1
7700000000030840007
4áâà1,4áâà2,4áâà3,4áâà5,4áâà5,4áâà6
7700000000030850001
4áâà9,4áâà26,6/7áâà1,6/7áâà2,7,8/6áâà1
7700000000030850002
9,11áâà1,13áâà3,13áâà4,15_17áâà1
7700000000030850003
1/3áâà1,2,2áâà2
7700000000030860001
12áâà1,12áâà1,14,16áâà1,18áâà1,18áâà1
7700000000030870001
1ª1,1ª2,2ª1,2ª1áâà1,2ª2,2ª2áâà1,2ª3
7700000000030880001
3ª1,3ª1áâà1,3ª2,3ª5,3ª6,3ª7,4áâà1
7700000000030880002
4áâà2,4ª1,4ª2,4ª3,4ª3áâà1,4ª3áâà2,4ª4
7700000000030880003
5,5ª1,5ª2,5ª2áâà1,5ª3,5ª3áâà1,5ª4,5ª5
7700000000030880004
5ª6,5ª7,5ª8,5,6,6ª1,6ª2,6ª3,6ª4
7700000000030880005
6ª4áâà1,6ª5,6ª6,6ª7,6ª7áâà1,6ª8,6
7700000000030880006
6áâà1,8,8ª1,8ª2,8ª3,10ª1,10ª2
7700000000030880007
10ª2áâà1,12áâà1,12áâà1,12áâà2,12áâà3
7700000000030880008
12áâà4,12áâà7,12áâà9,12ª1,12ª2,14ª1
7700000000030880009
9,9ª1,9ª2,9ª3,9ª4,9ª5,9ª5áâà1,9ª6
7700000000030880010
9ª6áâà1,9,11,11áâà7,11ª1,11,11áâà1
7700000000030880011
15,15áâà2,17,17áâà2,18/1,20,20ª1
7700000000030880012
20ª1áâà1,20ª2,20ª3,20ª4,20ª5,20ª6
7700000000030880013
21áâà1,21áâà2,22,22ª1,22ª1áâà1
7700000000030880014
22ª1áâà2,22ª2,22ª2áâà1,22ª3,22ª4,22ª5
7700000000030880015
22ª5áâà1,22ª6,22ª6áâà1,22ª7,23,24ª1
7700000000030880016
24ª2,24ª2áâà1,24ª3,24ª3áâà1,24ª4
7700000000030880017
24áâà1,24áâà2,24áâà2,24áâà3
7700000000030880018
24áâà4,24áâà5,24áâà6,24áâà7
7700000000030880019
7700000000030880020
24áâà13,24áâà14,24áâà15,24áâà16
7700000000030880021
24,26,26ª1,26ª1áâà2,26ª1áâà4,26ª2
7700000000030880022
26ª3,26ª3áâà1,26ª4,26ª5,26ª6,26ª6áâà1
7700000000030880023
26ª6áâà2,26ª6áâà3,26áâà1,26áâà2
7700000000030880024
26áâà3,26áâà4,26áâà5,26áâà6
7700000000030880025
7700000000030880026
7700000000030880027
26áâà15,26áâà16,28ª1,28ª2,28ª3,28
7700000000030880028
28áâà1,28áâà2,30ª1,30ª1áâà1,30ª2
7700000000030880029
30ª3,30ª3áâà1,30ª3áâà2,30ª4,30ª5
7700000000030880030
30áâà1,30áâà2,30,32,32ª1,32ª1áâà1
7700000000030880031
32ª2,32ª2áâà1,32ª2áâà2,32ª3,32ª4,32ª5
7700000000030880032
32áâà1,32áâà2,32áâà3,32áâà4
7700000000030880033
32áâà5,32áâà6,32áâà7,32áâà8
7700000000030880034
32áâà15,32áâà16,93áâà1,93áâà2
7700000000030880035
93áâà10,93,103_105áâà4,103_105áâà5
7700000000030880036
103_105áâà6,105áâà1,125,125áâà1
7700000000030880037
125áâà2,125áâà3,125áâà4,125áâà6
7700000000030880038
125áâà7,125áâà8,125áâà9,125áâà10
7700000000030880039
125áâà11,125áâà12,125áâà13,125áâà14
7700000000030880040
125áâà15,125áâà25,125áâà26,125áâà27
7700000000030880041
125,127áâà1,129áâà1,133áâà6
7700000000030880042
12,12áâà1
7700000000030890001
64,64áâà2,64áâà3,66
7700000000030890002
7,7áâà2,7áâà3,7ª1,10,22,66áâà1
7700000000030890003
1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà8,1
7700000000030910001
1áâà1,3,3áâà1,3áâà2,5áâà1,5áâà2,5áâà3
7700000000030910002
7700000000030910003
7700000000030910004
5áâà16,5áâà1,5áâà2,7,7áâà1,7áâà2
7700000000030910005
7áâà3,7áâà4,7áâà1,7áâà2,9,25áâà4
7700000000030910006
7700000000030910008
2áâà7,2áâà8,2áâà9,2,4,4áâà1,4áâà2
7700000000030910009
4áâà3,4áâà4,4áâà5,4áâà7,4áâà8,4áâà12
7700000000030910010
4áâà13,4áâà14,4áâà15,4áâà19,4áâà29
7700000000030910011
4áâà31,4áâà34,4áâà37,4áâà38,4áâà39
7700000000030910012
4áâà40,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000030910013
7700000000030910014
12áâà41
7700000000030910015
1áâà1,1áâà2,1áâà3,1áâà4,2,3,3áâà1
7700000000030920001
3áâà2,5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000030920002
7700000000030920003
5áâà12,5áâà13,5áâà20,5áâà26,7,7áâà2
7700000000030920004
7áâà3,7,7,31
7700000000030920005
25,99áâà1
7700000000030930001
3,9/13áâà2,9/13áâà3
7700000000030950001
3,3áâà1,3áâà2,3áâà3,3áâà5,3áâà6,3áâà7
7700000000030960001
3áâà8,3áâà9,3áâà11,3áâà12,3áâà17
7700000000030960002
7700000000030960003
3áâà1,4,6,6áâà1,6ª1,6ª2,8,8áâà1,8áâà2
7700000000030960004
7áâà1,7áâà2,7áâà3,7áâà5,7áâà6,7áâà7
7700000000030960005
7áâà8,7áâà9,7áâà10,7áâà12
7700000000030960006
1,3áâà1,3áâà2,5áâà2,5ª1,5ª2,6áâà1
7700000000030970001
7700000000030970002
7áâà1,7áâà3,7ª2,9,10,10/2áâà1,11/15
7700000000030970003
1ª1áâà2,1ª2,5ª2,5ª3,5ª3áâà2,5ª3áâà3
7700000000030980001
5ª4,5ª5,5ª6,6,6áâà1,6áâà2,6áâà4,7ª
7700000000030980002
7ªáâà2,7áâà3,7ª2,7ª3,7ª3áâà2,7ª4,7ª5
7700000000030980003
7ª6,8,9,10,10ª1,10ª2,10,10,12,12áâà2
7700000000030980004
12áâà5
7700000000030980005
11ª1,11ª2,13ª1,13ª2,15ª1,15ª2,17ª1
7700000000030980006
17ª2,17ª2áâà1,17ª2áâà2,18,18áâà1,19ª1
7700000000030980007
19ª2,20,21ª1,21ª2,21ª2áâà1,22ª1,22ª2
7700000000030980008
23ª1,23ª2
7700000000030980009
4,4áâà2,4ª1,4ª1áâà1,4ª2,4ª3,4ª3áâà1
7700000000030980010
1ª1,5ª1,7ª1
7700000000030980011
2,2áâà5,3,4,4áâà2,4,5áâà2,5ª1,5ª2,5
7700000000031010001
6,6áâà2,6/40áâà,7,8,8,8áâà2,9áâà1
7700000000031010002
9ª1,9ª2,9ª3,9ª3áâà2,9ª4,9ª4áâà3,9ª5,9
7700000000031010003
10,10áâà2,11ª1,11ª2,12,13,13áâà2,14
7700000000031010004
14áâà2,15ª1,15ª2,15ª3,15ª4,16,16áâà2
7700000000031010005
17áâà5,17áâà7,17áâà16,17ª1,17ª2,17ª3
7700000000031010006
17ª4,17,18,19,19áâà1,19áâà3,19áâà4
7700000000031010007
7700000000031010008
7700000000031010009
7700000000031010010
19áâà18,19áâà19
7700000000031010011
1,3,3áâà1,5,5,7,7áâà2,9,11,12,13
7700000000031020001
13áâà1,13áâà2,13áâà3,13áâà4,13ª4,15,17
7700000000031020002
21áâà2,21,21,27,27áâà2,27
7700000000031020003
14
7700000000031030001
1ª1,1ª2,1ª2áâà3,1ª1,1ª1áâà2,1ª2
7700000000031030002
1ª2áâà2,1ª3,1ª3áâà3,1ª1,1ª1áâà2
7700000000031030003
1,2áâà1,2ª2,2ª2áâà1,2ª2áâà2,2ª2áâà3
7700000000031030004
2ª2áâà4,2ª2áâà5,2ª2áâà6,2ª2áâà7
7700000000031030005
2ª2áâà8,2ª2áâà9,2/11,2,3ª1,3ª1áâà4
7700000000031030006
3ª1áâà5,3ª2,3ª3,3ª3áâà2,3ª3áâà4,4
7700000000031030007
4áâà2,4áâà3,4,5,5ª1,5ª2,5,7ª1,7ª1
7700000000031030008
7ª1áâà2,7ª1áâà3,7ª2,7ª3,7ª3áâà3,7
7700000000031030009
7áâà2,8,8áâà2,8ª1,8ª1áâà9,8,9áâà1
7700000000031030010
9áâà2,9áâà3,9áâà4,9áâà5,9áâà7,9áâà8
7700000000031030011
9áâà10,9ª3,9ª4,9ª4áâà2,9,9,9áâà1
7700000000031030012
9áâà2,11ª1,11ª2,11ª2áâà2,11ª2áâà3
7700000000031030013
12ª1,14,14áâà2,14áâà3,14ª1,14,14
7700000000031030014
27,27ª1,27ª1áâà3,27ª1áâà4,27ª2,27,27
7700000000031030015
29ª1,29ª2,29ª2áâà2,31ª1,31ª2,33ª1
7700000000031030016
33ª1áâà2,33ª2,37,37áâà1,37áâà2,39ª1
7700000000031030017
39ª2,39ª2áâà2,41ª1,41ª1áâà2,41ª2,41ª3
7700000000031030018
41ª3áâà2,41ª3áâà3,41ª3áâà4
7700000000031030019
13,13,15,15áâà2,16ª1,16ª1áâà2,16ª2
7700000000031030020
16,16,17,17áâà2,18,18áâà2,18,20ª1
7700000000031030021
20ª2,22,22áâà1,22áâà2,22áâà3,22áâà4
7700000000031030022
7700000000031030023
22áâà10,22áâà11,22áâà12,22áâà13
7700000000031030024
7700000000031030025
22áâà18,22áâà19,22áâà20
7700000000031030026
21ª1,21ª1áâà2,21ª2,21ª2áâà2,21ª2áâà3
7700000000031030027
21ª3,21ª4,23,23áâà2,23ª1,23ª1áâà2,23ª2
7700000000031030028
23ª3,24ª1,24ª1áâà4,24ª1áâà5,24ª2,24ª3
7700000000031030029
25,25ª1,25ª1áâà2,25ª2,26,26áâà2,26,28
7700000000031030030
28áâà2,28ª1,28,30áâà1,30áâà2,30ª1
7700000000031030031
30ª2,30ª2áâà2,30ª2áâà3,30ª2áâà5,30ª3
7700000000031030032
30ª4,30ª5,32áâà,32áâà1,32áâà2,32áâà3
7700000000031030033
32áâà4,32áâà5,32áâà6,32áâà7,32ª1
7700000000031030034
32ª1áâà2,32ª1áâà3,32,34ª1,34
7700000000031030035
47ª1,47ª2,47,49ª1,49ª2,49ª2áâà2
7700000000031030036
49ª2áâà3,49ª2áâà4,50ª1,50ª2,50ª3,51ª1
7700000000031030037
51ª2,51ª3,51ª4,51ª4áâà1,51ª5,51ª5áâà1
7700000000031030038
51ª6,51ª6áâà2,52ª1,52ª2,52ª3,53ª1
7700000000031030039
53ª1áâà1,53ª2,53ª2áâà2,53,54ª1,54ª2
7700000000031030040
54ª2áâà2,54ª3,55,56ª1,56ª1áâà3
7700000000031030041
56ª1áâà4,56ª2,56,56,57,57áâà2,58ª1
7700000000031030042
58ª2,58ª2áâà4,58ª2áâà5,58,59,59áâà2
7700000000031030043
59,59,60,60áâà2,60ª1,60ª1áâà2
7700000000031030044
60ª1áâà3,60ª1áâà4,60ª1,60ª2,60,61ª1
7700000000031030045
61ª2,61,61áâà3,61,62ª,62ª1
7700000000031030046
62ª1áâà2,62ª1áâà3,62ª2,62,62,63ª1
7700000000031030047
63ª1áâà2,63ª2,63,63,64ª1,64ª2
7700000000031030048
64ª2áâà2,64ª2áâà3,64ª2áâà4,64ª3
7700000000031030049
64ª3áâà3,64ª4,65,66ª1,66ª2,66ª3
7700000000031030050
66ª3áâà2,66ª4,66ª4áâà3,66ª5,66ª5áâà1
7700000000031030051
66ª5áâà2
7700000000031030052
36áâà1,36áâà3,36ª1,36ª1áâà2,38ª1
7700000000031030053
38ª1áâà1,38ª2,38ª2áâà2,38,40,40áâà2
7700000000031030054
40ª1,42ª1,42ª1áâà2,42ª1áâà3,42ª1áâà4
7700000000031030055
42ª2,42ª3,43ª1,43ª2,43ª2áâà2,43ª3,43ª4
7700000000031030056
43ª5,43ª6,44,44áâà3,44,45ª1,45ª1áâà2
7700000000031030057
45ª2,45,45áâà2,45ª1,46,46áâà2,48ª1
7700000000031030058
48ª2,48ª2áâà3,48ª2áâà4,48ª2áâà5,48ª3
7700000000031030059
7700000000031050001
1,1áâà2,1ª1,2,3áâà3,3áâà4,3áâà5,3ª1
7700000000031080001
3ª2,4,4áâà2,4áâà3,4áâà5,5,5ª,5áâà1
7700000000031080002
5áâà3,5áâà4,6,6áâà2,7,10,10áâà2,11ª1
7700000000031080003
11ª2,13áâà1,13áâà2,13áâà3,14,16,16áâà1
7700000000031080004
18,20,20,22,24,26,26áâà2,26áâà3,28
7700000000031080005
1,1/4ª1,1/4ª2,2,2áâà1,2áâà5,2áâà6
7700000000031090001
3áâà1,3áâà2,3áâà3,3áâà1,3áâà2,3áâà7
7700000000031090002
5,6/19áâà1,7/2,8áâà1,8áâà11,8áâà12
7700000000031090003
9áâà1,9áâà3,10áâà1,10áâà2,10áâà5
7700000000031090004
10áâà5,10áâà6,10áâà11,10áâà13,10áâà14
7700000000031090005
10áâà16,10áâà18,10áâà20,10áâà23,11áâà1
7700000000031090006
11áâà2,11áâà3,11áâà4,12áâà1,12áâà6
7700000000031090007
12áâà7,12áâà8,12áâà9,12áâà10,12ª2,12ª3
7700000000031090008
12ª4,12ª5,12ª7,12áâà1,12áâà2
7700000000031090009
12áâà4,12áâà5,13áâà1,13áâà2,13áâà3
7700000000031090010
13áâà4,14áâà1,14áâà3,14áâà8,14áâà9
7700000000031090011
15áâà1,15áâà2,15áâà5,15áâà6,17áâà1
7700000000031090012
19áâà1,19áâà2,23áâà1,23áâà2
7700000000031090013
2áâà1,2áâà2,2/9,2,6,6áâà1,8ª1,8ª1áâà1
7700000000031110001
8ª1áâà3,8ª2,8ª2áâà1,10ª1,10ª2,12/2
7700000000031110002
2,2,4,7,7,7áâà1,9
7700000000031150001
1/1áâà1,1/1áâà2,1/1áâà3,1_3,2áâà9,3
7700000000031160001
4áâà1,5,5áâà7,6,8,10,11,12,14áâà1
7700000000031160002
14áâà20,16,18áâà1,18áâà2,20áâà1,20áâà7
7700000000031160003
21/5áâà1,21/5áâà2,22áâà1,22áâà2,24áâà1
7700000000031160004
7700000000031160005
2,3,4/2
7700000000031170001
7700000000031180001
1,3,4,4áâà1,5,6,8,9,10,11,12/17,13/19
7700000000031190001
14/16,15/18,16,17,17áâà2,18,19,19
7700000000031190002
20,21áâà1,21,21áâà1,21áâà2,22,23,24
7700000000031190003
24ª2,24/1áâà1,25,26/15áâà1,26/15áâà27
7700000000031190004
26/15áâà28,26/15áâà30,26/15áâà31
7700000000031190005
26/15áâà34,26/15áâà39,27/22,28/14,29
7700000000031190006
29,30,31,32,33/17,34/17,35/16áâà1
7700000000031190007
35/16áâà2,35/16áâà21,37,38,39áâà1
7700000000031190008
39áâà14,41/9,41/9áâà2
7700000000031190009
1,1,1,1,1áâà2,2,2,2,3áâà1,3áâà12
7700000000031200001
4,5,6,7,7áâà4,8,9,9,10,11,12,13,14,15
7700000000031200002
16áâà1,16áâà2,17,17áâà4,18,19,20
7700000000031200003
20áâà4,20áâà10,21,23,23áâà1,23áâà2,24
7700000000031200004
24,25,25áâà2,26,27_29,27_29áâà2,28,30
7700000000031200005
30áâà1,31,32,33,33,34,35,36,37/20,38
7700000000031200006
39,43/15áâà1,43/15áâà12,45/28,47áâà1
7700000000031200007
1áâà1,2áâà1,2áâà3,3,3,3áâà2,4,4,5
7700000000031210001
5,6,7,8,10,11,12,13,14,15áâà1,15áâà2
7700000000031210002
16,16,16áâà5
7700000000031210003
1,2áâà1,2,3,5áâà1,5áâà6,6áâà1,6áâà2
7700000000031220001
6áâà3,6áâà4,7áâà1,7áâà2,7,8_8áâà1,9
7700000000031220002
10,11,12,13,13áâà1,13áâà4,15,18/15
7700000000031220003
1áâà1,1áâà2,3,4,4áâà1,7,8,9,10,12
7700000000031230001
1,1áâà1,2áâà3,2áâà4,2áâà5,3,4áâà1
7700000000031240001
4áâà10,5áâà1,5áâà2,6áâà1,6áâà2,6áâà3
7700000000031240002
6áâà4,6áâà5,6áâà6,6áâà7,6ª6,7,7áâà1
7700000000031240003
7áâà3,8ª1,8,8,9,10,11áâà1,11áâà2
7700000000031240004
11áâà6,12,13,15áâà4,18,18,20,35áâà1
7700000000031240005
1,1áâà1,1ª1,3,3ª1,4,4áâà1,4ª1,5ª1,6
7700000000031250001
6áâà1,7,8,11,13,15,17,17ª1,19,19áâà1,19
7700000000031250002
2/3,4áâà1,4áâà2,4áâà3,5áâà1,5áâà2
7700000000031260001
5áâà9,5áâà13,7
7700000000031260002
9,11,11áâà2,13,15,15áâà2,15áâà3,17,19
7700000000031270001
21,22ª1,22ª2,23,23áâà1,24,25áâà1
7700000000031270002
25áâà2,25ª1,25ª2,25ª2áâà1,26,26áâà1
7700000000031270003
27áâà1,27ª2,28,30
7700000000031270004
1ª1,1ª2,1ª2áâà2,1ª2áâà3,1ª3,1ª4,2,3
7700000000031270005
4ª1,4ª1áâà2,4ª2,5,5áâà2,5ª1,5ª2,6,6,7
7700000000031270006
7ª1,7/1,8ª1,8ª2,10ª1,10ª2,12,12áâà2
7700000000031270007
14ª1,14ª1áâà2,14ª1áâà3,14ª2,14ª3,14ª4
7700000000031270008
16ª1,16ª2,16ª3,18ª,18ª1,18ª2
7700000000031270009
8áâà1,8ª2
7700000000031280001
2,2áâà1,2áâà3,4,4áâà2,4ª2,5,6,8,10
7700000000031300001
10áâà1,10áâà2,10áâà3
7700000000031300002
2,2áâà1,3,4,5,6,7,9,9áâà2
7700000000031310001
7700000000031320001
7700000000031320002
1áâà13,1áâà14,1áâà1,5,5ª2,7,7ª1,7,9
7700000000031320003
9áâà1,11ª1,11ª2,11ª4,11ª4áâà1,11ª5
7700000000031320004
11ª6,11ª6áâà1,11ª7,11ª8,13,15
7700000000031320005
2,4áâà4,4ª1,4ª2,4ª3,4,6,6ª1,6ª1áâà1
7700000000031320006
6ª2,6ª3,8,10áâà3,10ª1,10ª2
7700000000031320007
29ª1,29ª2
7700000000031330001
57,57áâà2,57áâà3,57áâà4,57áâà6,59ª1
7700000000031330002
59ª1áâà2,59ª1áâà3,59ª1,59ª2
7700000000031330003
31áâà,31áâà,31áâà5,31áâà6,31áâà8
7700000000031330004
31áâà9,31áâà11,31áâà15,31áâà18,31áâà19
7700000000031330005
31áâà20,31áâà22,31áâà23,31áâà27
7700000000031330006
28ª3,28ª4,28/11áâà2,28/11áâà3
7700000000031330007
31áâà32,31,33,35,37,37áâà2,37áâà3
7700000000031330008
37áâà4,37áâà5,37áâà6,37áâà7,37áâà8
7700000000031330009
37áâà9,37áâà10,37áâà11,37áâà12,37ª6,39
7700000000031330010
63ª1,63ª2,63ª2áâà2,65ª1,65ª2,67,69/32
7700000000031330011
30áâà2,30/12,30,30,32,34,34áâà2
7700000000031330012
34áâà3,34áâà4,34áâà5,34áâà6,34áâà7
7700000000031330013
34áâà8,36,38,40,44,44áâà2,44áâà3,46ª1
7700000000031330014
46ª2,46ª3,46ª4,48,48áâà2,48áâà3,50
7700000000031330015
50áâà2,52,54,56,58,58áâà2,58áâà4
7700000000031330016
2,2áâà1,4áâà1,4áâà2,6,6áâà2,8áâà1
7700000000031330017
7700000000031330018
9áâà7,9áâà8,9áâà9,10ª1,10ª2,12,13áâà1
7700000000031330019
7700000000031330020
7700000000031330021
7700000000031330022
7700000000031330023
7700000000031330024
7700000000031330025
7700000000031330026
13áâà32,14áâà2,14áâà9,14áâà17,14áâà18
7700000000031330027
14áâà19,14áâà20,14áâà21,15,16áâà3
7700000000031330028
16áâà4,16áâà5,16ª1,16ª2,16ª8,17,17áâà2
7700000000031330029
17ª3,18áâà1,18áâà2,19,19,20,21áâà1,22
7700000000031330030
23,24,25ª1,25ª2,26áâà1,26áâà2,26áâà3
7700000000031330031
7700000000031330032
7700000000031330033
26áâà14,26áâà16,26áâà17,26áâà23,27
7700000000031330034
28/11áâà4,28/11áâà9
7700000000031330035
2áâà4,2ª1,2ª2,2ª2áâà1,4áâà1,4áâà2
7700000000031350001
7700000000031350002
4áâà9,6ª1,6ª2,6ª2áâà1
7700000000031350003
1ª1,1ª2,1ª3,1ª3áâà1,1ª4,3,3ª1,3ª1áâà1
7700000000031350004
3ª1áâà2,5,5áâà2,5ª2,7,7ª1,7ª2,7ª2áâà1
7700000000031350005
8/1ª1,8/1ª2,8/1ª3,9,9ª3,9ª4,9ª5,10áâà1
7700000000031350006
10áâà2,10,11,11ª1,11ª2,11ª2áâà1,11ª3
7700000000031350007
11ª3áâà2,12/2ª1,12/2ª2,12/2ª3,13ª1
7700000000031350008
13ª1áâà1,13ª2,13ª3,13ª4,13,14/1ª1
7700000000031350009
14/1ª2,15ª1,15ª2,15ª2áâà1,15ª2áâà2
7700000000031350010
16ª1,16ª2,16ª2áâà1,16,17,17áâà1
7700000000031350011
17áâà2,17ª1,17ª1áâà1,17ª1áâà2,17ª1áâà3
7700000000031350012
17ª1áâà4,17ª2,17ª3,17ª3áâà1,17ª3áâà2
7700000000031350013
17ª3áâà3,18ª1,18ª2,19ª1,19ª1áâà1,19ª2
7700000000031350014
19ª3,19ª4,19ª5,19ª6,20,20,20áâà1
7700000000031350015
7700000000031350016
7700000000031360001
4ª1,4ª2,6,6áâà2,8ª1,8ª2
7700000000031360002
7700000000031370001
1áâà7,1áâà11,1áâà16,3áâà1,3áâà2,3áâà3
7700000000031370002
3áâà4,3áâà5,6áâà1,6áâà2,6áâà3,6áâà4
7700000000031370003
6áâà5
7700000000031370004
áâà2,áâà3
7700000000031390001
2áâà1,2áâà1,2áâà2,2áâà3,2áâà4
7700000000031390002
2áâà5,3áâà1,3áâà2,3áâà3,4áâà1,4áâà2,6
7700000000031390003
8áâà1,8áâà2,8áâà2,8,10,12,12áâà2,14
7700000000031390004
16,18,20,20áâà6,22,24,24áâà2,24áâà2
7700000000031390005
24áâà3,26
7700000000031390006
32áâà1,32áâà2,32áâà3,32áâà4,32áâà6,34
7700000000031390007
34áâà1,34áâà6,34áâà7,34áâà8,34áâà9
7700000000031390008
34áâà10,34áâà11,34áâà13,34áâà14
7700000000031390009
34áâà18,34áâà19,34áâà20,34áâà21
7700000000031390010
34áâà23,34áâà26,34áâà27,34áâà28
7700000000031390011
34áâà30,34áâà31,34áâà32,34áâà39
7700000000031390012
34áâà40,34áâà41,34áâà42,34áâà43
7700000000031390013
1,3,3áâà2,5,5áâà2,7áâà2,7ª1,7ª2,9,11ª1
7700000000031400001
11ª2,11ª3,13áâà1,13áâà2,13áâà3,13áâà4
7700000000031400002
15áâà1,17áâà1,17áâà3,17ª1,17ª2,17ª3
7700000000031400003
19,19áâà2,23áâà1,25
7700000000031400004
2,3,3,4,4áâà1,4áâà2,4,5,6,6,6
7700000000031410001
6áâà1,8,8áâà1,8áâà3,8,8áâà1,8,8,9
7700000000031410002
10,10,10,10,11,11áâà1,12,12áâà1,12
7700000000031410003
12áâà1,12áâà2,12,13,14,15
7700000000031410004
7700000000031420001
7700000000031420002
1áâà13,1áâà14,1áâà15,1áâà15,1áâà15
7700000000031420003
1áâà15,1áâà15,1áâà17,1áâà19,1áâà20
7700000000031420004
1áâà21,1áâà22,1áâà24,1áâà27,1áâà28
7700000000031420005
1áâà29,1áâà31,1áâà35,1áâà37,1áâà57
7700000000031420006
1áâà71,1áâà72,1áâà73,1áâà78,1áâà79
7700000000031420007
1áâà81,1áâà83,1áâà84,1áâà86,1áâà87
7700000000031420008
1áâà88,1áâà89,1áâà92,1áâà93,1áâà98
7700000000031420009
1áâà100,1áâà102,1áâà103,1áâà105
7700000000031420010
1áâà106,1áâà107,1áâà108,1áâà109
7700000000031420011
1áâà110,1áâà111,1áâà112,1áâà113
7700000000031420012
1áâà114,1áâà115,1áâà116,1áâà117
7700000000031420013
1áâà126,2,2áâà1,2áâà2,2áâà3,2áâà4
7700000000031420014
2áâà5,2áâà6,2áâà7,2áâà8,2áâà10,2áâà11
7700000000031420015
7700000000031420016
7700000000031420017
7700000000031420018
7700000000031420019
2áâà33,2áâà34,2áâà35,2áâà36,2áâà37
7700000000031420020
2áâà38,2áâà39,2áâà40,2áâà41,2áâà42
7700000000031420021
2áâà44,2áâà45,4áâà1,4áâà2,4áâà3,4áâà4
7700000000031420022
4áâà7,4áâà9,4áâà13,4ª1,4ª1áâà1,4ª1áâà2
7700000000031420023
4ª1áâà3,4ª1áâà4,4ª1áâà5,4ª1áâà6
7700000000031420024
4ª1áâà7,4ª1áâà8,4ª1áâà11
7700000000031420025
7700000000031430001
1ª1,1ª2,5ª1,5ª2,7ª2,9ª1,9ª2,9ª2áâà1
7700000000031430002
9ª3,11ª2,13ª1,13ª2,15ª2,17ª1,17ª2,19ª1
7700000000031430003
19ª1áâà1,19ª1áâà2,19ª2,19ª2áâà2,21
7700000000031430006
23/2,25,25áâà1,25áâà2,27,27áâà1,27áâà2
7700000000031430007
27ª1,29,31ª1,31ª2,33áâà1,33áâà2,35
7700000000031430009
35áâà1,35áâà2,37,37ª1,37ª1áâà1,37ª2
7700000000031430010
37,39áâà2,39ª2,41,41áâà2,43,45,45,47
7700000000031430011
47áâà1
7700000000031430012
7700000000031430013
85áâà1,85áâà2,85áâà3,85áâà4,85
7700000000031430004
85áâà1,85áâà2,85áâà3
7700000000031430005
85áâà1,85áâà2,85áâà3,85áâà5,85áâà11
7700000000031430014
85áâà12,85áâà13,85áâà14,85áâà15,85áâà16
7700000000031430015
7700000000031430008
2,2áâà1,6ª1,6ª2,8,8áâà1,8,10
7700000000031430016
12/23áâà2,14,16,16áâà1,20,22áâà1
7700000000031430017
22áâà2,22,24,28
7700000000031430018
2,2áâà4,2áâà5,2áâà6,2áâà7,2áâà10
7700000000031440001
7700000000031440002
2áâà16,2áâà17,2áâà18,2áâà21,2áâà22
7700000000031440003
2áâà23,2áâà24,2ª2,2ª3,2ª20,2,5ª1,7,9
7700000000031440004
9áâà3,9áâà4,9áâà5,9áâà7,9áâà8,9áâà9
7700000000031440005
7700000000031440006
9áâà17,9áâà18,9áâà20,9áâà21,9áâà22
7700000000031440007
7700000000031440008
7700000000031440009
9áâà33,9áâà40,9áâà64,9áâà65,9áâà80
7700000000031440010
21ª1,21ª2,21ª4,21,23ª1,23ª2,23ª2áâà1
7700000000031450001
25ª1,25ª2,27,27ª1,27ª2,29ª1,29ª2
7700000000031450003
29ª2áâà1,31/18ª1,31/18ª1áâà1
7700000000031450004
31/18ª1áâà2,31/18ª1áâà6,31/18ª2,31/18ª3
7700000000031450005
7700000000031450002
8,8,8áâà1,10,10/1,10,12,14,16ª1
7700000000031450006
16ª2,16ª3,16ª4,16ª5,18ª1,18ª2,18ª2áâà1
7700000000031450007
18ª3,20,20áâà1,20áâà2
7700000000031450008
7ª1,7ª2,7ª2áâà1,7,7áâà1,7áâà3
7700000000031450009
7áâà5,7áâà6,7áâà9,7áâà13,7ª1,7ª3
7700000000031450010
7ª5,7ª6,7ª9,7ª13,7áâà1,9,9áâà1
7700000000031450011
9áâà2,11,11áâà1,11áâà2,11áâà3
7700000000031450012
7700000000031450013
11áâà8,11áâà9,11áâà10,11áâà11
7700000000031450014
11áâà12,11áâà13,11áâà14,11áâà15
7700000000031450015
7700000000031450016
11áâà20,11áâà21,11áâà22,11áâà23
7700000000031450017
11áâà24,11áâà32,11áâà35,11áâà40
7700000000031450018
11áâà41,11áâà42,11áâà43,11áâà1
7700000000031450019
11áâà2,11áâà3,11áâà4,11áâà5,13,15
7700000000031450020
15áâà1,15áâà2,15áâà3,15,19,19áâà1
7700000000031450021
19áâà2,19ª1,19
7700000000031450022
3ª1,3ª1áâà1,3ª2,3ª3,3ª4,4,5ª1,5ª2,5ª3
7700000000031450023
5ª4,5,6
7700000000031450024
11,11,13ª1,13ª2,13ª3,13,13,15ª1
7700000000031480001
15ª1áâà2,15ª2,16,16áâà1,16áâà2,16,16
7700000000031480002
16,16,17ª1,17ª1áâà1,17ª1áâà3,17ª2
7700000000031480003
17ª3,17ª3áâà2,17ª3áâà3,17ª4,17ª4áâà2
7700000000031480004
17ª5,18,19ª1,19ª1áâà1,19ª2,19ª3,20
7700000000031480005
20áâà2,21,21ª1áâà1,21ª2,21,22,23ª1
7700000000031480006
23ª2,23ª2áâà1,24,24áâà1,24,24,25áâà1
7700000000031480007
25/24,25/24áâà2,25/24áâà3,25,27,28,29
7700000000031480008
7700000000031480009
1ª1,1ª1áâà1,1ª1áâà2,1ª2,1ª2áâà1
7700000000031480010
1ª2áâà2,1ª3,1ª4,1ª5,1ª5áâà2,1,2ª1,2ª2
7700000000031480011
2ª2áâà1,2ª2áâà2,2ª2áâà3,3,3ª1,3ª2
7700000000031480012
3ª2áâà1,3ª3,3ª3áâà1,3ª4,3ª4áâà2,4ª1
7700000000031480013
4ª1áâà2,4ª2,5ª1,5ª2,5ª4,5ª4áâà1,6,6ª2
7700000000031480014
6ª4,6ª4áâà1,7ª1,7ª2,7ª6,7ª7,7ª7áâà2,8
7700000000031480015
8ª1,8ª2,9,9ª1,9ª1áâà2,9ª2,9ª2áâà1,9
7700000000031480016
9,9,9,10ª1,10ª1áâà2,10ª2,12,12áâà1
7700000000031480017
12áâà2,12,12áâà1,12,14,14ª1,14ª2,14
7700000000031480018
4,5/2,6,7/27,10
7700000000031490001
12áâà4,13,14/13áâà5,14_24áâà1,15,17,19
7700000000031500001
21,23,25,26_42áâà1,27áâà1,29,31,35,37
7700000000031500002
39_41,43_45,47,48,49,51_53
7700000000031500003
2áâà11,2/1áâà1,2/1áâà2,2/1áâà3,2/1áâà4
7700000000031540001
2/1áâà5,2/1áâà7,2/1áâà8,4/2áâà1
7700000000031540002
4/2áâà2,4/2áâà32,4/2áâà33,4/2áâà34
7700000000031540003
4/2áâà35,4/2áâà36,4/2áâà37,4/2áâà38
7700000000031540004
4/2áâà39,4/2áâà40,4/2áâà41,4/2áâà42
7700000000031540005
7700000000031540006
8áâà8,10áâà1,10áâà2,10áâà3,10áâà5
7700000000031540007
10áâà6,10áâà7,10áâà9,10áâà10,10áâà12
7700000000031540008
10áâà14,12áâà1,12áâà2,16áâà2,18
7700000000031540009
2áâà1,2_4áâà1,3_5áâà1,3_5áâà2,6áâà4,7
7700000000031570001
8,9,9,10,10áâà1,11áâà1,12,13áâà1
7700000000031570002
14_16áâà1,14_16áâà7,15_17áâà1,17áâà1
7700000000031570003
18áâà2,19áâà1,20,21áâà1,22áâà1,23áâà1
7700000000031570004
24áâà1,25áâà1,25áâà2,26_28áâà1
7700000000031570005
26_28áâà3,27áâà1,27áâà8,30áâà1,32
7700000000031570006
32áâà2,34_36áâà8,34_36áâà9,34_36áâà10
7700000000031570007
38,38áâà1,40,42,44áâà1,44áâà2
7700000000031570008
1,2áâà1,2áâà2,2áâà3,3áâà1,3áâà2,3áâà3
7700000000031580001
3áâà6,5,5áâà2,6,7,8,8áâà6,9/5,10/7,11
7700000000031580002
11,11,11áâà3,12,13,14,15/5,16áâà1
7700000000031580003
16áâà2,16áâà3,16áâà4,17,19
7700000000031580004
7700000000031580005
32áâà6,32áâà7,32áâà8,32áâà9,32áâà10
7700000000031580006
32áâà11,32áâà12,32áâà16,32áâà1
7700000000031580007
32áâà2,34áâà1,34áâà2,34áâà3,34áâà4
7700000000031580008
34áâà5,34áâà6,34áâà7,34áâà8,34áâà10
7700000000031580009
34áâà11,34áâà12,34áâà13,34áâà1,36áâà1
7700000000031580010
7700000000031580011
37áâà1,37áâà4,37áâà8,38áâà1,38áâà2
7700000000031580012
38áâà2,39áâà1,39áâà2,39áâà3,39áâà4
7700000000031580013
39áâà4,39áâà5,39áâà6,39áâà7,39áâà7
7700000000031580014
7700000000031580015
39áâà13,39áâà14,39áâà15,39áâà16
7700000000031580016
39áâà17,39áâà24,39áâà56,39áâà64
7700000000031580017
39áâà65,39áâà66,39_áâà1,39_áâà2,39
7700000000031580018
39áâà3,39áâà4,39áâà6,39áâà8
7700000000031580019
39áâà10,39áâà11,39,39áâà1,40áâà1
7700000000031580020
40áâà2,40áâà3,40áâà4,40áâà5,40áâà6,41
7700000000031580021
42,42ª2,43,43áâà3,44,44áâà1,46,46ª2
7700000000031580022
18,18áâà1,20,20áâà2,20áâà3,22,23áâà1
7700000000031580023
23áâà2,23áâà4,23áâà5,23áâà6,24,25áâà1
7700000000031580024
26,26áâà3,27áâà1,28,28áâà2,29áâà1
7700000000031580025
7700000000031580026
29áâà7,29áâà8,29áâà10,29áâà11,29áâà12
7700000000031580027
29áâà19,30,31ª1,31ª2áâà1,33áâà1,33áâà3
7700000000031580028
35áâà1
7700000000031580029
17,19,21,21áâà1,21áâà2,23,23,25,25ª2
7700000000031590001
25,27ª1,27ª1áâà1,27ª2,29ª1,29ª2
7700000000031590002
29ª2áâà1,29ª2áâà2,29ª2áâà3,29ª5
7700000000031590003
29ª5áâà1,31ª1,31ª2,31ª3,33,33áâà1,35
7700000000031590004
35áâà1,35áâà2,35ª2,37áâà1,37ª1,37ª2
7700000000031590005
37ª3,39ª1,39ª1áâà1,39ª2,41,41ª1,41ª2
7700000000031590006
41,45ª1,45ª2,45ª2áâà1,47ª1,49ª1
7700000000031590007
49ª1áâà1,49ª1áâà2,49ª2áâà1,51,51áâà2
7700000000031590008
51,53,55ª1,55ª2,55ª3
7700000000031590009
1,1ª1,3ª1,3ª1áâà2,3ª2,3ª2áâà1,3ª2áâà2
7700000000031590010
3ª3áâà1,3ª3áâà2,5,7ª1,7ª1áâà1,7ª2,9
7700000000031590011
9ª2áâà1,9,11,11áâà1,11ª2,11ª3,13,13ª1
7700000000031590012
13ª1áâà1,15
7700000000031590013
57ª1,57ª2,59ª1,59ª1áâà2,59ª1áâà3,59ª2
7700000000031590014
61,61ª1,61ª2,63,63áâà1,63áâà2,63ª1,63
7700000000031590015
65ª1,65ª2,65ª2áâà1,67ª1,67ª2,69
7700000000031590016
18ª1,18ª2,18,18,20,20áâà1,22,22ª1,24
7700000000031590017
26,28,28áâà2,28,28áâà1,30áâà2,30ª1
7700000000031590018
30ª1áâà1,30,32,34,34áâà1,34,36ª2,48
7700000000031590019
48áâà1,50,50,52,52áâà1,52,56
7700000000031590020
2,2,4,4áâà1,4áâà2,6,6áâà1,6,8áâà1
7700000000031590021
8áâà2,10,12,12áâà1,12áâà3,12
7700000000031590022
1áâà1,1áâà2,1áâà3,1,2,2áâà1,2áâà2,4
7700000000031600001
4ª1,5,5áâà1,5ª1,5ª1áâà1,5ª2,5ª2áâà1,6
7700000000031600002
6áâà1,6áâà2,6ª1,6ª2,6ª3,6ª4,7,7áâà1
7700000000031600003
7áâà2,8,8ª1,9,9áâà1,9ª1,9ª2,9ª3,9,10
7700000000031600004
10ª1,11,12,12áâà1,13,13áâà1,14,14áâà1
7700000000031600005
14áâà2,15,15,16,17,17áâà1,18,19,19ª1
7700000000031600006
19ª2,19ª3,19,20,22,24,26,26áâà1,28
7700000000031600007
28ª1,28ª1áâà1,30,30áâà1,30ª1
7700000000031600008
1,1ª2,3áâà1,3áâà2,3áâà4,5áâà1,5áâà2
7700000000031630001
5ª1áâà1,7ª1,7ª2,7ª2áâà1
7700000000031630002
2,6,6ª1,8,10ª1,10ª1áâà2,14,14áâà2
7700000000031630003
1,2,3,4áâà1,7,8,9,10,11,12,13,14
7700000000031640001
15áâà1,15áâà2,16,17,19,21,23,25,26,27
7700000000031640002
28,29,30,31,32,33,34,35,36,37áâà1,38
7700000000031640003
38áâà5,39
7700000000031640004
2/3,4áâà1,6áâà1,6áâà2,6áâà4,7
7700000000031650001
1/26,3ª1,3ª2,5,7,7áâà1,7áâà3,9,10,11
7700000000031660001
11,12,13,14áâà1,14áâà5,14áâà6,14áâà10
7700000000031660002
14áâà12,14áâà13,15,15áâà1,16áâà1
7700000000031660003
16áâà8,16ª1,16ª3,16ª8,17/16,18,18áâà2
7700000000031660004
7700000000031660005
7700000000031660006
18áâà13,20áâà1,20áâà2,25,26áâà1
7700000000031660007
26áâà2,26áâà3,26áâà4,26áâà5
7700000000031660008
4,5,5ª2,6,6ª2,8,8áâà2,10ª2,11/16,13
7700000000031670001
13ª1,13ª2,15,15áâà2,16ª5áâà3,16ª7áâà1
7700000000031670002
17ª1,17ª2,17ª3,19,19áâà2,19áâà8,21
7700000000031670003
10,10áâà1,10áâà2,10áâà3,10áâà4,14
7700000000031670004
14áâà2,14áâà5,14áâà6,14áâà7,14áâà9
7700000000031670005
14áâà11,14áâà12,14áâà15,18,18áâà2
7700000000031670006
2,3ª1,3ª2,4,4áâà2,7,8,8áâà1,8áâà2
7700000000031680001
8áâà3,8áâà4,9,12,12áâà2
7700000000031680002
1,1áâà2,1,2,3ª1,3ª2,3ª3,4,4áâà1,4áâà2
7700000000031690001
7áâà1,7ª1,7ª2,7,7áâà2,7áâà3,9,9
7700000000031690002
9áâà1,9áâà2,9áâà3,9áâà4,9áâà5
7700000000031690003
9áâà6,11ª1,11ª2,13,13áâà2,13,15ª1
7700000000031690004
15ª2,15áâà1
7700000000031690005
7700000000031700001
1áâà8,1áâà9,1áâà11,1áâà12,1áâà1
7700000000031700002
1áâà2,1áâà3,1áâà6,1áâà1,3áâà1
7700000000031700003
7700000000031700004
3áâà15,3áâà16,3áâà19,5áâà1,5áâà2,5áâà3
7700000000031700005
7700000000031700006
7áâà1,7áâà2,9,9áâà1,11,11áâà1,13,13ª1
7700000000031700007
15,15áâà1,17,17ª1,17ª1áâà1,17áâà1,19
7700000000031700008
19áâà1,19áâà2,21,21ª1,21ª2,21ª2áâà2,21
7700000000031700009
2/1áâà1,2/1áâà2,2/1áâà3,2,2áâà1
7700000000031700010
2áâà2,2áâà3,4,6,8,8áâà2,10,10áâà1
7700000000031700011
10áâà2,10áâà1,12,12áâà1,12ª1,12ª1áâà1
7700000000031700012
12ª2,12ª3,12ª3áâà1,12áâà1,14,14,18
7700000000031700013
18áâà1,18ª1,18ª1áâà1
7700000000031700014
38/66,38/66áâà1,42,42áâà1,44ª1,44ª2
7700000000031700015
44ª3,44ª4,44ª5,44,46,48,48áâà3,48,50
7700000000031700016
52,52ª2,52,54,54áâà1,56/72,58áâà1
7700000000031700017
58ª1,58ª2,58,58áâà2,60,60áâà1,60áâà5
7700000000031700018
62/59,66,66áâà1,68,68áâà1,70,70áâà1
7700000000031700019
70áâà1,70áâà2,70áâà3,70áâà4
7700000000031700020
70áâà5,70áâà6,70áâà7,70áâà8
7700000000031700021
70áâà9,70,70áâà2,72,72áâà1,72áâà2
7700000000031700022
74,74áâà1
7700000000031700023
20,20áâà1,24,24áâà3,24ª1,26ª1,26ª2
7700000000031700024
26ª2áâà1,26ª2áâà2,26ª3,26ª3áâà1,26
7700000000031700025
28/56,30,30áâà1,32,32,32áâà2,32áâà3
7700000000031700026
32áâà4,32áâà5,32áâà6,34,34áâà1,36/59
7700000000031700027
97,97áâà1
7700000000031700028
78,82,82áâà1,82áâà4,82ª1,82ª1áâà1
7700000000031700029
82ª1áâà2,82ª2,82ª2áâà1,82,82,84
7700000000031700030
84áâà1,86,88ª2,88ª2áâà1,88ª3,90,90áâà1
7700000000031700031
90,90,92áâà17,92ª1,92ª2,92ª3
7700000000031700032
92ª3áâà1,92ª4,92ª5,92ª5áâà1,92ª6,92ª7
7700000000031700033
92ª7áâà11,92ª8,94,96,96áâà1,98/57
7700000000031700034
98áâà1,100áâà1,100áâà3,100áâà4
7700000000031700035
100áâà5,100áâà6,100áâà7,100ª1,100ª1
7700000000031700036
100ª2,100ª3,100ª5,100ª6,100ª20,100ª54
7700000000031700037
100ª100,100ª101,100ª102,100ª104
7700000000031700038
100ª106,100ª107,100ª108,100áâà1
7700000000031700039
102áâà1,102
7700000000031700040
75,75áâà1,75áâà2,77,77áâà1,77ª1,77ª2
7700000000031700041
77ª2áâà1,77ª3,77ª4,77,77áâà1
7700000000031700042
7700000000031700043
23áâà6,23áâà7,23áâà8,23,23áâà1,25/15
7700000000031700044
25/15áâà1,27,29,29áâà2,29,29áâà1,31
7700000000031700045
33,35ª1,35ª2,37,39,41,43ª1,43ª2
7700000000031700046
43ª2áâà1,43ª3,45,45,47ª1,47ª2
7700000000031700047
47ª2áâà1,49,51,51áâà2,53,55,57ª1,57ª2
7700000000031700048
57ª3,57,61áâà2,63,67ª2áâà1,67ª2áâà2
7700000000031700049
69,69áâà2,69áâà3,71ª1,71áâà1,73,73áâà1
7700000000031700050
7700000000031700051
79,79áâà2,79ª1,79ª2,79,79áâà1,81
7700000000031700052
81áâà1,85ª1,85ª1áâà1,85ª2,85ª3
7700000000031700053
85ª3áâà1,85ª4,85ª5,87ª1,89/2,91,91áâà2
7700000000031700054
91ª1,91ª1áâà1,91ª2,91ª3,91áâà1,93
7700000000031700055
95,95ª1
7700000000031700056
3,3áâà3,4,5áâà1,5áâà2,6áâà1,6áâà2
7700000000031710001
6áâà6,8,9áâà1,10,11,12,13,18ª1,18ª2,20
7700000000031710002
22,22ª1,24áâà1,24áâà2,24áâà4,24áâà4
7700000000031710003
24áâà5,25/20,27ª1,28,29,31,32áâà1,33
7700000000031710004
61/2áâà30,61/2áâà31,61/2áâà34
7700000000031710005
7700000000031710006
38áâà1,38áâà2,40áâà1,42,42áâà1,42áâà2
7700000000031710007
42áâà2,42áâà4,47áâà1,47áâà2,49,51áâà2
7700000000031710008
51/4áâà1,51/4áâà2,58áâà3,60/2áâà1
7700000000031710009
60/2áâà2,61/2,61/2áâà1,61/2áâà4
7700000000031710010
61/2áâà5,61/2áâà6,61/2áâà7,61/2áâà8
7700000000031710011
61/2áâà9,61/2áâà10,61/2áâà11,61/2áâà17
7700000000031710012
61/2áâà22,61/2áâà24,61/2áâà25
7700000000031710013
61/2áâà54,61/2áâà55,62,64áâà1,64áâà2
7700000000031710014
68,68áâà1
7700000000031710015
36áâà1,36,38,40,44,46,48,50,50áâà1
7700000000031720001
50áâà2,53,53áâà1,53áâà2,53áâà3,53áâà4
7700000000031720002
53áâà5,53ª1,53ª2,53ª3,53ª4,53ª5,53ª6
7700000000031720003
53ª7,53ª8,53ª9,53ª10,53ª11,53ª15,53ª16
7700000000031720004
53ª17,54,54,55,57/20,57,58,58áâà1
7700000000031720005
58,58
7700000000031720006
3,3áâà2,5,5,5áâà1,7,7,8,9,11,11áâà1
7700000000031720007
11,16,16_18áâà1,20,20áâà1,22,26,32/7
7700000000031720008
32/7áâà3,35,41,41
7700000000031720009
4áâà1,6,8,9áâà1,9áâà2,10áâà1,10áâà2,12
7700000000031730001
1,2áâà2,4,5,6,7,8,9,10,12,13,15,16,17
7700000000031740001
18,19,20,22,24,25,26,27,28,29,31,32,34
7700000000031740002
35,36,37,38,40,41,42,43,44
7700000000031740003
1,3,5,11/13,13/15,15áâà1,15áâà2,15áâà3
7700000000031750001
16áâà1,17,18,19áâà4,19/1áâà1,19/1áâà2
7700000000031750002
19/1áâà3,19/1áâà5,19/1áâà7,19/1áâà12
7700000000031750003
20,23áâà1,23áâà2,25,26áâà1,26áâà2,28,30
7700000000031750004
8,11/13
7700000000031760001
3áâà1,5/7áâà2,5/7áâà3,9/26áâà1
7700000000031780001
9/26áâà3,11áâà1,11/28áâà5,13áâà1,20,22
7700000000031780002
7700000000031780003
22áâà6,26áâà2
7700000000031780004
2,4áâà1,6/8,8áâà1,8áâà2,8áâà3,8áâà4
7700000000031780005
8áâà5,8áâà12,8áâà13,8áâà14,10áâà1
7700000000031780006
12áâà1,16áâà1,18,18áâà1,18áâà2,18áâà3
7700000000031780007
2,2áâà1,3,4,4áâà1,4áâà2,4ª1,4ª1áâà1
7700000000031800001
4ª2,4ª4,5,5áâà1,5ª1,5_,6,6ª1,8,8ª
7700000000031800002
8ª1,9,9,10,11,11áâà1,13,13áâà1,13
7700000000031800003
7700000000031820001
1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà6,1áâà13
7700000000031820002
1áâà14,1áâà18,5áâà1,5áâà2,5áâà4,5áâà5
7700000000031820003
7700000000031820004
5áâà12,5áâà13,5áâà14,5áâà16,5áâà20,6ª1
7700000000031820005
6ª1áâà2,6ª1áâà4,6ª2,6ª2áâà1,6ª2áâà2,7
7700000000031820006
7/9áâà7,8,8áâà1,12,12áâà1,12ª1,16/18
7700000000031820007
20,20áâà2,20áâà3,20áâà4,20áâà5,23áâà1
7700000000031820008
23áâà2,38,38áâà1,38áâà2,38áâà3,38áâà5
7700000000031820009
38áâà9,38áâà12,40,40áâà7,42,88áâà1
7700000000031820010
88áâà2,88áâà4
7700000000031820011
6/28,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5
7700000000031850001
10áâà1,10,12
7700000000031850002
1ª,1ª,1áâà12,1áâà13,1áâà14,1áâà17
7700000000031850003
1áâà19,1áâà20,1áâà20,1áâà21,1ªáâà22
7700000000031850004
1ª,1ª5,1ª20áâà24,3/10áâà1,3/10áâà2
7700000000031850005
3/10áâà3,3/10áâà4
7700000000031850006
1,1áâà1,1áâà2,1áâà3,7,12áâà1,12áâà2
7700000000031870001
12,12áâà2,12,12áâà1,14áâà1,14áâà2
7700000000031870002
14áâà3,14áâà4,20,20áâà3,20áâà7,20áâà8
7700000000031870003
20áâà11,21,21áâà1,21áâà2,21áâà6,21áâà7
7700000000031870004
21áâà8,21áâà9,21áâà10,21áâà11,21áâà12
7700000000031870005
21áâà13,21áâà15,21áâà15,21áâà16
7700000000031870006
21áâà17,21áâà18,21áâà19,21áâà20
7700000000031870007
21áâà21,21áâà22,21áâà24,21áâà25
7700000000031870008
21áâà26,21áâà27,21áâà29,21áâà30
7700000000031870009
21áâà31,21áâà32,21áâà33,21áâà35
7700000000031870010
21áâà37,21áâà38,21áâà40,21áâà45
7700000000031870011
21áâà48,21áâà49,21áâà53,21áâà54
7700000000031870012
21áâà55,21áâà57,21áâà58,21áâà59
7700000000031870013
21áâà60,21áâà62,21áâà64,21áâà65
7700000000031870014
21áâà68,21áâà69,21áâà70,21áâà80,21ª3
7700000000031870015
21ª4,21ª5,21ª23,21ª28,21ª30,21ª41
7700000000031870016
23áâà8,23áâà39,24,24áâà1,24áâà3,24áâà4
7700000000031870017
27áâà1,27áâà1,27áâà2,27áâà3,27áâà3
7700000000031870018
27áâà3,27áâà4,27áâà5,27áâà6,27áâà7
7700000000031870019
27áâà8,27áâà9,27áâà10,27áâà11,27áâà16
7700000000031870020
28,28áâà2,28áâà3,32,32áâà2,32áâà3,32
7700000000031870021
46áâà1,46áâà2,46áâà3,46áâà4,52áâà1
7700000000031870022
52áâà2,52áâà4,52áâà5,52áâà6,52áâà7
7700000000031870023
52áâà8,52áâà9,52áâà14,52áâà16,52áâà17
7700000000031870024
52áâà21,52áâà22
7700000000031870025
29áâà1,29áâà2,31áâà1,31áâà2,31áâà3
7700000000031870026
33áâà1,33áâà2,33áâà3,33áâà4,33áâà5
7700000000031870027
35áâà1,35áâà2,35áâà4,37,37áâà3,37ª1
7700000000031870028
37/4,37/4áâà1,37/4áâà2,58,60,60áâà2
7700000000031870029
1,1ª2,1ª3,1ª4,1ª4áâà2,1ª5,1,1,2áâà1
7700000000031880001
2áâà2,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000031880002
7700000000031880003
7700000000031880004
3áâà19,3áâà20,3áâà23,3áâà25,3áâà26
7700000000031880005
3áâà27,3áâà28,3áâà29,3áâà31,3áâà32
7700000000031880006
3áâà33,3áâà36,3áâà39,3áâà42,3áâà43
7700000000031880007
3áâà46,3áâà48,3áâà49,3áâà50,3áâà51
7700000000031880008
3áâà52,3áâà53,3áâà54,3áâà55,3áâà56
7700000000031880009
3áâà57,3áâà59,3áâà61,3áâà63,3áâà70
7700000000031880010
3áâà71,3áâà72,3áâà73,3áâà78,3áâà79
7700000000031880011
3áâà80,3áâà81,3áâà82,3áâà83,3áâà84
7700000000031880012
3áâà85,3ª1,3ª1áâà2,3ª1,3ª1áâà2
7700000000031880013
3ª1áâà3,3ª1áâà4,3ª1áâà5,3ª1áâà6
7700000000031880014
3ª1áâà7,3ª2,3ª2áâà2,3ª2áâà3,3ª2áâà4
7700000000031880015
3ª2áâà5,3ª2áâà6,3ª2áâà7,3ª2áâà8
7700000000031880016
3ª2áâà9,3áâà1,3áâà2,3áâà3,3áâà4
7700000000031880017
7700000000031880018
3áâà10,3áâà11,3áâà12,3áâà13,3
7700000000031880019
3áâà3,3áâà4,3áâà6,3áâà8,3áâà9
7700000000031880020
3áâà11,3áâà12,3áâà13,3,3áâà2
7700000000031880021
3áâà3,4,4áâà2,4áâà3,4áâà4,4áâà5,4áâà6
7700000000031880022
4áâà7,4áâà8,4,5,5áâà2,5áâà3,5áâà4
7700000000031880023
5áâà5,5áâà6,5áâà7,5áâà8,5áâà10
7700000000031880024
5áâà11,5áâà12,5áâà13,5áâà16,6
7700000000031880025
6áâà2,6áâà3,7ª2,7ª2áâà2,7ª2áâà6
7700000000031880026
7ª2áâà7,7,7áâà1,7áâà2,7áâà3,7áâà4
7700000000031880027
7áâà5,7áâà7,7áâà9,7áâà27,7áâà28
7700000000031880028
7áâà34,7,8,8áâà2,8áâà3,8áâà4,8áâà5
7700000000031880029
8áâà6,8áâà7,8áâà8,9ª1,9ª1áâà2,9ª1áâà4
7700000000031880030
9ª1áâà5,9ª2,9ª2áâà2,9ª2áâà3,9ª2áâà4,10
7700000000031880031
10áâà1,10áâà4,10áâà5,10áâà6,10áâà7
7700000000031880032
10áâà9,10áâà11,10áâà14,12,12áâà2
7700000000031880033
12áâà3,12áâà4,12áâà5,14,16,16áâà2
7700000000031880034
7700000000031880035
7700000000031880036
7700000000031880037
7700000000031880038
16áâà21,16áâà22,16áâà23,16áâà24
7700000000031880039
16áâà25,16áâà26,16áâà27,16áâà28
7700000000031880040
16áâà37,16,16áâà2,16áâà3,18áâà2
7700000000031880041
18áâà3,18áâà4,18áâà5
7700000000031880042
3,4,5,7
7700000000031890001
áâà18,2,2áâà1,2áâà2,2áâà3,2áâà5,2áâà6
7700000000031910001
2áâà7,2áâà8,2áâà9,2áâà10,2áâà11,2áâà19
7700000000031910002
2áâà26,2áâà27,2ª1,2áâà1,6,6áâà1,16/13
7700000000031910003
18/14,18,20,22ª1,22ª2,24
7700000000031910004
7700000000031950001
12,16,16áâà2,16áâà3,16áâà4,16áâà6
7700000000031960001
17ª1,17ª2,17ª3,17ª4,18,22áâà1,22áâà2
7700000000031960002
22áâà3,22áâà4,22áâà5,22áâà1,22áâà2
7700000000031960003
22áâà3,22áâà4,22áâà5,22áâà1
7700000000031960004
1,4ª1,4ª2,4ª3,4ª4,4ª6,4ª7,4ª9,4ª10
7700000000031960005
4ª12,6ª1,6ª2,7,7áâà14,8,12áâà2,13áâà1
7700000000031960006
13áâà2,14,14,15ª1,15ª2,16,16áâà3
7700000000031960007
1,5,7,7áâà2,7,9,9áâà1,9áâà2,11,11áâà1
7700000000031990001
7700000000031990002
18,20áâà1,20áâà2,20áâà3,20áâà4,20áâà5
7700000000031990003
7700000000031990004
2áâà8,2áâà9,2áâà11,2áâà12,2áâà13
7700000000031990005
2áâà15,2áâà17,2áâà20,2áâà27,4,6,6,8
7700000000031990006
8áâà1,10áâà1,12,12,12áâà1,12áâà2
7700000000031990007
12áâà3,12áâà4,12áâà5,12áâà6,13,14
7700000000031990008
7700000000031990009
7700000000031990010
14áâà12,14áâà13,17,17áâà1,17áâà2
7700000000031990011
17áâà3,17,17,19,19áâà1,21,21áâà1,25
7700000000031990012
25áâà1,25áâà2,27,27,27
7700000000031990013
1,2,2ª1,2ª1áâà1,2ª1áâà2,4,6,7,8,9
7700000000032000001
9áâà1,9ª1,10,10,11,11,12,13,14áâà1
7700000000032000002
15áâà1,15áâà2,16,17,19,20áâà1,21,22,23
7700000000032000003
24,25,26,27,28,29,30,31,32,33,34,35,36
7700000000032000004
37,38,39,39áâà1,40,41,42,43áâà1,43áâà2
7700000000032000005
44,45áâà1,45,47,49,49áâà2,51,52,53
7700000000032000006
55áâà1,55áâà2,57,59,59,61,63,65,67,69
7700000000032000007
71,73,90áâà1,92ª1,92ª2,92ª3,92ª4,92ª5
7700000000032000008
92ª6,92ª7,92ª8,92ª9,92ª10,92ª11,92ª12
7700000000032000009
92ª13,92ª13áâà1,92ª14,92ª15,92ª16
7700000000032000010
92ª17,92ª18,92ª19,92ª20,92ª21,92ª22
7700000000032000011
92ª23,92ª24,92ª25,92ª26,92ª27,92ª28
7700000000032000012
93ª1,93ª1áâà1,93ª1áâà2,93ª1áâà3
7700000000032000013
93ª1áâà4,93ª2,93ª2áâà1,93ª3,93ª4,93ª5
7700000000032000014
93ª6,93ª7,93ª8,93ª9,93ª9áâà1,93ª10
7700000000032000015
93ª11,93ª12,93ª13,93ª14,93ª15,93ª16
7700000000032000016
93ª17,93ª18,93ª19,93ª20,93ª21,93ª22
7700000000032000017
93ª22áâà1,93ª23,93ª24,93ª25,93ª26
7700000000032000018
93ª27,93ª28,93ª29,93ª30,93ª31,93ª32
7700000000032000019
93ª33,93ª34,94,94áâà1,94áâà2,94ª1,94ª2
7700000000032000020
94ª3,94ª4,94ª5,94ª6,94ª7,95,95áâà1
7700000000032000021
95ª1,95ª1áâà1,95ª2,95ª2áâà1,95ª3
7700000000032000022
95ª3áâà1,97,97áâà1,97áâà2,97ª1,101,105
7700000000032000023
1áâà1,1áâà8,1áâà9,1ª1,1ª2,1ª3
7700000000032010001
1ª4,1ª5,1ª6,1ª7,3áâà1,3áâà2,4,5,6
7700000000032010002
7,7áâà1,7áâà2,7áâà1,7áâà2,7áâà3
7700000000032010003
1ª1,1ª2,1ª2áâà1,1áâà1,1áâà2,3áâà1
7700000000032020001
3áâà2,3áâà3,3áâà4,3áâà5,4,6ª1,6ª2,6ª3
7700000000032020002
8ª1,8ª2,10ª1,12ª1,12ª2
7700000000032020003
1,1,3,4,5áâà1,5áâà2,5áâà3,5áâà4,5,6
7700000000032030001
6áâà1,8,8áâà1,8,10,10
7700000000032030002
12,15,15áâà1,15áâà2,16,16áâà1,18
7700000000032030003
18áâà1,18ª3,18ª3áâà1,18ª4,19,19
7700000000032030004
19áâà1,19,19áâà3,19áâà4,19áâà5
7700000000032030005
19áâà6,19,19,20ª2,20,21,21áâà1
7700000000032030006
21áâà3,21ª2,21ª2áâà2,21ª3,21,21áâà1
7700000000032030007
21,22ª1,22ª2,22ª3,23,23áâà2,23ª2,23ª3
7700000000032030008
23ª4,23,23,23,24ª1,24ª2,24,25
7700000000032030009
25áâà1,25ª3,25ª4,25ª4áâà1,26ª1,26ª2,27
7700000000032030010
27ª2,28ª1,28ª2,29,29ª4,29ª5,29
7700000000032030011
29áâà1,29áâà2,29,29,29,30,30
7700000000032030012
30áâà1,30áâà2,31,31ª3,31ª4,31,32
7700000000032030013
33áâà1,33áâà2,34,35,35áâà1,35áâà2,35
7700000000032030014
35áâà1,35,35,35,36,37,37áâà1
7700000000032030015
37áâà2,37,37áâà1,37áâà2,37,37,37
7700000000032030016
37áâà1,37áâà2,37áâà3,41,41ª4,41
7700000000032030017
41áâà2,41,41,43,43,43,43,45
7700000000032030018
45áâà2,47,49,49áâà2,49áâà1,49áâà2
7700000000032030019
2,3,4,5ª4,5ª5,5ª6,7
7700000000032040001
3,4,6,8,9,10,19áâà1,19áâà2,19áâà3
7700000000032060001
22áâà1,22áâà2,24
7700000000032060002
2,2ª1,4áâà1,4/4áâà2,4/4áâà3,10
7700000000032070001
4áâà1,4áâà4,6áâà14
7700000000032080001
3,5,5ª2,6,6áâà2,6ª1,6ª2áâà2,7,7ª1,8ª1
7700000000032090001
8ª2,9,9áâà2,9áâà3,10ª1,10ª2,10ª2áâà2
7700000000032090002
7700000000032090003
1,2,3,4,5,5áâà1,6,6,6,7,8,8áâà1,8,10
7700000000032100001
1,1ª2,1ª2áâà2,1ª2áâà3,1,1,2,2,2,3
7700000000032110001
4ª2,4ª2áâà2,4ª3,5,6,6,6,7ª1,7ª1áâà2
7700000000032110002
7ª2,7ª2áâà2,8,9,10,10ª1,10ª1áâà2,11
7700000000032110003
11áâà2,12,14,14áâà2
7700000000032110004
3/7,8,10,10áâà2,10áâà3,15áâà1,15/17
7700000000032120001
10ª1
7700000000032120002
2,2áâà1,2áâà2,2áâà3,2áâà4,5,6,7,9
7700000000032130001
9áâà1,9áâà2,11,15
7700000000032130002
8,8áâà1,8áâà2,8áâà3,8áâà4,10,12áâà6
7700000000032140001
12áâà7,12ª1,12ª2,12ª3,15áâà2,15áâà3
7700000000032140002
15áâà4,17áâà1,17ª1,17ª8,17ª9,17ª10
7700000000032140003
17ª11,17ª12,17ª13,17ª14,17ª15,19áâà1
7700000000032140004
19áâà2,19áâà3,24,24áâà2,24áâà3,24áâà4
7700000000032140005
24,28,28áâà3,28áâà12,28áâà13,30
7700000000032140006
1áâà1,2ª1,2ª2,2ª3,2ª4,2ª5,2ª5,2ª6,2ª7
7700000000032150001
2ª8,2ª11,2ª12,2ª13,2ª14,2ª16,2ª19,2ª20
7700000000032150002
2ª21,2ª22,2ª23,2ª24,2ª25,2ª26,2ª27,5,9
7700000000032150003
9áâà9,9áâà10,9áâà12,9áâà13,9ª2,9ª3,9ª4
7700000000032150004
9ª5,9ª6,9ª7,9ª8,13,15,15áâà2,17,17,18
7700000000032150005
19áâà1,19áâà2,19áâà7,20áâà1,20áâà2
7700000000032150006
22áâà3,24,26,28,28áâà1,30,32
7700000000032150007
5áâà1,7ª1,7ª2,9,19áâà2,19áâà4
7700000000032160001
19_21áâà1,22,23áâà5,23ª1,23ª2,24
7700000000032160002
1,3,3áâà2,3ª1,3,4,4ª2,6,6ª,6áâà2
7700000000032170001
6ªáâà2,6áâà3,6ª1,6ª1áâà2,6,7,8,8,11
7700000000032170002
7700000000032170003
7700000000032170004
11áâà11,11áâà14,11áâà15,11áâà17
7700000000032170005
11áâà18,11áâà19,11áâà20,11áâà21
7700000000032170006
11áâà24,11áâà27,11áâà28,11áâà29
7700000000032170007
11áâà30,11áâà31,11áâà32,11áâà33
7700000000032170008
11áâà36,11áâà37,11áâà38,11áâà41
7700000000032170009
11áâà47,11áâà50,11áâà53,11áâà71
7700000000032170010
11áâà72,11áâà73,11áâà80,11áâà82
7700000000032170011
11áâà83,11áâà85,11áâà86,11áâà88
7700000000032170012
11áâà89,12,12áâà2,12áâà3,12áâà4,12áâà5
7700000000032170013
12,12áâà1,12áâà2,12áâà3,12áâà4
7700000000032170014
13,14ª1,14ª2,14ª2áâà2,14ª3,14ª4,14ª5
7700000000032170015
14ª5áâà2,14ª6,14ª7,14ª8,14ª9,14ª9áâà2
7700000000032170016
14ª10,14ª10áâà2,14,14
7700000000032170017
1/8,3,5,5áâà2,5áâà3,7,7áâà1,9,9áâà1
7700000000032180001
9áâà2,11,15
7700000000032180002
2,17,19,19áâà1,19áâà2,21,23,25,25ª1
7700000000032180003
25ª2,27,29,31,33,35/7,35/7áâà2
7700000000032180004
1/9,2,3,4áâà1,4ª1,4ª2,5,5áâà2,7,8ª1
7700000000032200001
8ª2,8ª3,8ª4,8ª5,8ª6,8ª7,8ª8,9,9ª2áâà1
7700000000032200002
9ª2áâà2,9ª2áâà3,9ª2áâà4,9ª2áâà5
7700000000032200004
9ª2áâà6,9
7700000000032200005
7700000000032200003
10,10,12áâà1,12áâà2,12áâà3,12áâà4
7700000000032200006
12,14áâà1,14áâà2,14áâà3,14áâà5,14ª1
7700000000032200007
14ª2,16
7700000000032200008
10,10ª1,10ª2,10ª3,10ª4,10ª5,11,11ª2
7700000000032200009
13ª1,13,13áâà1,13áâà2,13,15ª1,15ª2
7700000000032200010
15ª2áâà1,15ª3,17,17áâà1,17ª2,17ª2áâà1
7700000000032200011
19ª1,21,21,23,23áâà1
7700000000032200012
1,1áâà1,1áâà2,1áâà6,1ª1,1ª1áâà1,1áâà1
7700000000032210001
1áâà2,1áâà10,1,2áâà1,2ª1,2ª2
7700000000032210002
2ª2áâà1,3áâà1,3áâà2,3áâà3,3áâà5
7700000000032210003
3ª2áâà1,3ª2áâà2,3ª2áâà3,3ª2áâà4
7700000000032210004
3ª2áâà5,3ª3áâà1,3ª3áâà2,3ª3áâà3
7700000000032210005
7700000000032210006
3ª3áâà8,3ª3áâà9,3ª3áâà10,3ª3áâà11
7700000000032210007
3áâà1,4ª1,4ª2,4ª3,4ª4,4ª4áâà2,5,5áâà2
7700000000032210008
5áâà3,5áâà4,5áâà5,5áâà6,5,6,6ª1
7700000000032210009
6ª1áâà1,6ª2,6ª2áâà1,7,8ª1,8ª2,8ª2áâà2
7700000000032210010
8ª3,8ª4,8ª5,8ª6,8ª7,8ª9áâà1,8ª9áâà2,8
7700000000032210011
9,9áâà2,9áâà3,10,10ª1,10ª1áâà3,10,11
7700000000032210012
11áâà2,12áâà1,12ª1,12ª2,12ª2áâà1,13ª1
7700000000032210013
13ª1áâà1,13ª1áâà2,13ª2,14,16,18,18áâà1
7700000000032210014
18áâà2,18ª2,18ª2áâà2,19áâà1,19áâà2
7700000000032210015
19áâà3,19áâà4,19áâà6,19áâà7,19áâà8
7700000000032210016
24áâà1,24áâà2,24ª1,24ª2,25,25áâà1
7700000000032210017
25áâà2,25áâà3,26,26áâà1,26áâà2,26áâà6
7700000000032210018
26áâà7,26áâà9,26áâà10,26áâà11,26ª1
7700000000032210019
26ª2,26ª3,26ª4,26ª5,26ª6,26ª7,26ª8
7700000000032210020
26ª9,26ª10,26ª11,26ª12,26ª12áâà1,26ª13
7700000000032210021
26ª14,26ª14áâà1,26ª14áâà2,26ª15,26ª19
7700000000032210022
26ª20,26,26áâà1,26áâà1,26áâà2
7700000000032210023
26áâà3,27,28,28/2áâà1,30,30áâà1
7700000000032210024
30áâà2,31,34,34áâà1,36,36áâà1,38áâà1
7700000000032210025
38áâà2,38áâà4,38áâà1,40,42,44,44áâà1
7700000000032210026
46,47áâà1,48,49,50,51,51áâà1,51,52,54
7700000000032210027
55,55ª1,55,57,57áâà2,59,59áâà1,59áâà2
7700000000032210028
61,61ª1,61ª2,61ª3,61ª4,61ª5,63,63áâà2
7700000000032210029
65,67,69,69áâà1,107,107ª2,107ª2áâà1
7700000000032210030
107,107áâà1,107,109,109ª1,109ª1áâà1
7700000000032210031
109ª2,109ª2áâà2,109ª3,111,111ª1,111ª2
7700000000032210033
111ª3,114,114áâà3,114ª1,114ª2,116
7700000000032210034
116ª1,116ª2,116ª2áâà1,116ª3,116
7700000000032210035
116áâà1,118áâà1,118ª1,118ª2,118ª2áâà1
7700000000032210036
118ª3,118ª4,120ª1,120ª1áâà2,120ª2
7700000000032210037
120ª2áâà1,120ª3,120
7700000000032210038
113ª2,115,117,117áâà1,117áâà2,117áâà3
7700000000032210039
119,121,121,121,121,122ª1,122ª1áâà1
7700000000032210040
125,125ª1,126,126,126áâà1,126áâà2
7700000000032210041
127,128,128ª1,129,130ª1,130ª2
7700000000032210042
130ª2áâà2,131,131,132,132,133,134
7700000000032210043
135,136,136áâà1,138,140,142,142áâà3
7700000000032210044
142áâà4,142áâà6,142áâà10,142ª1,142ª2
7700000000032210045
1,2,2áâà2,3,4,4ª2,4ª2áâà2,4ª2,5,5áâà2
7700000000032220001
6,6ª2,7,7,7áâà2,8,9,10,11áâà4,11áâà5
7700000000032220002
11ª1,11ª2,11ª3,11ª4,11,12,12áâà1,13
7700000000032220003
14,15,16,18,20ª1,20ª2,20ª2áâà2,22áâà1
7700000000032220004
22áâà3,22,22ª2,22ª2áâà2,24ª1,24ª2
7700000000032220005
24ª2áâà4,26,28
7700000000032220006
19,21ª1,21ª1áâà2,23,25,25ª2,25ª2áâà1
7700000000032220007
25ª3,25,27áâà11,27ª1áâà1,27ª2
7700000000032220008
27ª2áâà1,27ª2áâà2,27ª3,27ª4,27ª4,27ª5
7700000000032220009
27ª6,27ª7,27ª8,27ª8áâà1,27ª9,29ª1,29ª2
7700000000032220010
29ª3,29ª4,30,31áâà8,31ª1,31ª2,31ª3
7700000000032220011
31ª4,31ª5,31ª6,34áâà5,34ª1,34ª2,34ª3
7700000000032220012
34ª4,36ª1,36ª1áâà2,36ª1áâà3,36ª2
7700000000032220013
13áâà1,13ª1,13ª1áâà1,13ª2,17ª1
7700000000032230001
17ª1áâà1,17ª2,19,21ª1,21ª2,21ª2áâà1
7700000000032230002
2,3,3áâà1,3áâà2,3,3áâà2,5,5áâà1
7700000000032230003
5áâà2,5ª2,7,7áâà1,9ª2
7700000000032230004
1,1áâà2,2ª1,2ª2,3,4ª1,4ª2,4ª3,5,5
7700000000032240001
5áâà1,5,6,7,7,8ª1,8ª2,8ª3,8ª4,9,9
7700000000032240002
10,10áâà2,10ª2,10ª3,10,11,11áâà2,11
7700000000032240003
11áâà2,12ª1,12ª2,12ª3,12ª3áâà1
7700000000032240004
12ª3áâà2,13,13áâà2,13áâà3,13,13áâà1
7700000000032240005
14,14ª1,14ª1áâà1,15,15,15,16ª1,16ª2
7700000000032240006
16,17,17,18,19,19áâà2,19áâà3,20ª1
7700000000032240007
20ª1áâà1,20ª2,21,21áâà2,22,23,24ª1
7700000000032240008
24ª2,24ª3,24ª4,24,25,25ª2,26,26áâà1
7700000000032240009
26ª1,26ª2,26ª3,26ª3áâà2,26ª4,28,30
7700000000032240010
30ª1,30ª2,32,34ª1,34ª2
7700000000032240011
2áâà1,2áâà1,2áâà2,2áâà2,2áâà3,2áâà3
7700000000032250001
2áâà4,2áâà4,2áâà5,2áâà5,2áâà8,2áâà9
7700000000032250002
7700000000032250003
7700000000032250004
7700000000032250005
7700000000032250006
2áâà21,2áâà22,2áâà23,2áâà24,2áâà47
7700000000032250007
1/15áâà1,1/15áâà2,1/15áâà3,1/15áâà5
7700000000032260001
1/15áâà6,1/15áâà7,1/15áâà8,1/15áâà9
7700000000032260002
1/15áâà10,5
7700000000032260004
6áâà1,6áâà4,6áâà5,6_8áâà4,6_8áâà5
7700000000032260005
6_8ª1áâà3,8áâà1,8áâà2,10/2áâà1
7700000000032260006
10/2áâà2,10/2áâà4,10/2áâà5,12,12áâà3
7700000000032260007
11/6áâà1,11/6áâà2,11/6áâà3,11/6áâà8
7700000000032260008
11/6áâà9,11/6áâà10,11/6áâà11,11/6áâà13
7700000000032260009
11/6áâà14,11/6áâà19,11/6ª4,11/6ª5
7700000000032260010
11/6ª12
7700000000032260011
1,3áâà1,9/6áâà1,9/6áâà3,9/6áâà4
7700000000032270001
9/6áâà5,9/6áâà7,9/6áâà8,10áâà1,10áâà2
7700000000032270002
10áâà3,11áâà1,13,13áâà3,14/8,16
7700000000032270003
1ª2,1ª2áâà1,1ª2áâà2,1ª2áâà3,1,2,3
7700000000032280001
3áâà1,3ª2,3ª2áâà2,3ª3,3ª4,4,4ª2
7700000000032280002
4ª2áâà2,6,6áâà1,8,9ª1,9ª2,9ª3,11
7700000000032280003
14áâà2,14áâà3,14/5
7700000000032280004
7700000000032310001
3,3áâà2,3,5,7,7áâà2,7áâà6,8áâà1
7700000000032320001
4áâà1,5,15áâà1,15áâà2,15áâà3,18_20áâà1
7700000000032330001
2,2áâà2,4áâà1,4áâà2,6áâà1,8áâà1,10áâà1
7700000000032340001
12áâà1,14áâà1,14áâà2,20áâà1
7700000000032340002
1,16áâà1
7700000000032350001
7700000000032380001
1,1áâà2,2áâà1
7700000000032390001
3,5,5áâà1,5áâà2,5,10,12,12áâà2,12áâà3
7700000000032400001
7700000000032400002
12áâà9,12áâà10,12áâà11,12áâà13,12áâà14
7700000000032400003
12áâà15,12áâà16,12áâà17,12áâà19
7700000000032400004
12áâà20,12áâà21,12áâà22,12áâà23
7700000000032400005
7700000000032400006
12áâà28,12áâà29,12áâà31,12áâà34
7700000000032400007
12áâà35,12áâà36,12áâà37,12áâà38
7700000000032400008
12áâà39,12áâà40,12áâà41,12áâà42
7700000000032400009
12áâà44,12áâà46,12áâà48,12áâà49
7700000000032400010
12áâà50,12áâà51,12áâà52,12áâà55
7700000000032400011
12áâà56,12áâà1,12áâà2,12áâà3,12áâà4
7700000000032400012
1,3,4ª1,4ª2,5,5/14,6,6áâà2,7,9
7700000000032410001
3,3áâà1,4ª1,4ª1áâà1,4ª1áâà2,4ª2
7700000000032440001
4ª2áâà1,4ª2áâà2,4,6,7,7áâà1,7áâà2
7700000000032440002
8/17,8/17áâà1,8/17áâà2,9,11,11áâà1
7700000000032440003
11áâà2,13
7700000000032440004
2ª1,2ª2,2ª3,2ª4,2ª4áâà1,2ª4áâà3,2ª5,4
7700000000032480001
4áâà1,4áâà2,4ª1,4ª2,6,6áâà1,6ª2
7700000000032480002
6ª2áâà1,6ª2áâà3,6ª2áâà4,8,8áâà2,10,16
7700000000032480003
18ª1áâà1,18ª1áâà2,18ª2,18ª3,20ª1,20ª2
7700000000032480004
20ª3,20ª4,20ª4áâà2,20ª5,22ª1,22ª3
7700000000032480005
22ª3áâà1,22ª3áâà2,24,24áâà1,24áâà2
7700000000032480006
7700000000032480007
24áâà8,24áâà9,24áâà10,24áâà11,24áâà12
7700000000032480008
24áâà13,24áâà16,24áâà17,24áâà18
7700000000032480009
24áâà19,24áâà20,24áâà21,24áâà26
7700000000032480010
24áâà29,24áâà39,24áâà42,24ª1
7700000000032480011
1ª1,1ª2,1ª3,1ª4,1ª5,1ª6,1ª6áâà1,1ª7
7700000000032480012
3ª1,3ª2,3ª3,3ª4,3ª5,3ª6,3ª7,5ª1
7700000000032480013
5ª1áâà2,7,9,9áâà2,15áâà1,15ª1,17ª1
7700000000032480014
17ª2,17ª3,19áâà2,19ª1,19ª1áâà1,19ª2
7700000000032480015
19ª3,23ª1,23ª2,23ª2áâà2
7700000000032480016
7700000000032490001
17áâà2,17áâà6,17áâà13,17áâà14,17áâà15
7700000000032520001
7700000000032520002
17áâà1,17áâà3,17áâà5,17áâà7,17áâà8
7700000000032520003
17áâà9,17áâà10,17áâà11,17áâà12,17áâà16
7700000000032520004
17áâà24,17áâà25,17áâà73,17
7700000000032520005
1,1,1,1,2,3,3,5,5áâà1,8áâà1
7700000000032550001
7700000000032560001
4,5,6,7,8,9,10,12
7700000000032570001
3,12/11áâà34,12/11áâà34,12/11áâà60
7700000000032600001
12/11ª1,12/11ª2,12/11ª3,12/11ª4
7700000000032600002
12/11ª5,12/11ª6,12/11ª8,12/11ª10
7700000000032600003
12/11ª11,12/11ª12,12/11ª13,12/11ª14
7700000000032600004
12/11ª15,12/11ª16,12/11ª17,12/11ª19
7700000000032600005
12/11ª20,12/11ª21,12/11ª22,12/11ª23
7700000000032600006
12/11ª24,12/11ª25,12/11ª28,12/11ª29
7700000000032600007
12/11ª30,12/11ª31,12/11ª32,12/11ª33
7700000000032600008
12/11ª35,12/11ª36,12/11ª39,12/11ª40
7700000000032600009
12/11ª43,12/11ª48,12/11ª53,12/11ª57
7700000000032600010
12/11ª58
7700000000032600011
1áâà1,4
7700000000032610001
7700000000032630001
11,11_,11_áâà1,11_áâà2,11
7700000000032680001
ª2,ª2áâà2,ª3,ª3áâà2,ª3áâà3,ª4,ª5,ª5
7700000000032730001
ª6,ª6áâà1,ª7,ª11
7700000000032730002
2,2áâà2,2áâà2,2áâà3,2áâà4,2áâà6
7700000000032840001
2áâà7,2áâà8,2áâà9,2áâà11,2áâà15,3,4
7700000000032840002
4áâà2,4áâà3,5,7
7700000000032840003
11,13áâà1,13áâà2,13áâà11,19,21,27áâà1
7700000000032850001
29,31áâà1,31áâà4
7700000000032850002
13/17áâà1,13/17áâà2,13/17áâà3
7700000000032890001
2áâà1,2áâà2,4,4áâà3,6áâà1,6áâà2,8áâà1
7700000000032890002
7700000000032890003
12áâà3,12áâà4,14áâà1,14áâà2,14áâà3
7700000000032890004
14áâà4,14áâà5,14áâà6,14áâà16,16áâà2
7700000000032890005
16áâà3,16áâà4,16áâà5,16áâà6,16áâà6
7700000000032890006
16áâà7,16áâà8,16áâà10,16áâà12,16áâà13
7700000000032890007
18áâà1,18áâà2,18áâà3,18áâà5,18áâà6
7700000000032890008
18áâà7,18áâà8,20,24/2
7700000000032890009
1áâà1,1áâà2,3,5/9,7,11,15,15áâà2
7700000000032890010
23/15áâà1,23/15áâà2,23/15áâà3
7700000000032890011
23/15áâà4,25áâà1,25áâà2,25áâà3,27
7700000000032890012
27áâà2,27áâà3,27áâà6,29áâà1,29áâà3
7700000000032890013
29áâà4
7700000000032890014
9ª1,9ª2,9ª3,9ª3áâà1,9ª4,9ª6,9,9
7700000000032960001
9áâà1,11,11ª1,11ª1áâà1,11ª1áâà2
7700000000032960002
11ª1áâà3,11ª1áâà4,11ª2,12,13,14,14
7700000000032960003
14,15,15áâà1,16,16,17,17,18/4
7700000000032960004
2ª1,2ª1áâà1,2ª2,2,4,6,6ª1,6ª1áâà1,6
7700000000032960005
8,8áâà1,8ª1,8ª2áâà2,10,10áâà1,10áâà2
7700000000032960006
11,11áâà1,25áâà4,25áâà5
7700000000032980001
3,5,7,7áâà2,7áâà3,11,11áâà2,11áâà3
7700000000032990001
11áâà4,11áâà5,11áâà13,11áâà14,13ª1
7700000000032990002
13ª1áâà3,13ª1áâà4,13ª2,19/15,21ª1,21ª2
7700000000032990003
21ª3,23,25,27
7700000000032990004
4,6,6áâà2,6áâà3,6áâà4
7700000000032990005
20áâà1,20áâà3
7700000000032990006
29,29áâà1,31,32,32,32,33,34,34áâà1
7700000000032990007
35ª1,35ª2,37,39ª1,39ª2,41,43,45ª1,45ª2
7700000000032990008
2,2áâà1,2áâà2,2áâà3,2áâà11,9,9áâà1
7700000000033070001
9áâà3,9áâà4,9áâà5,9áâà6,9áâà7,9áâà8
7700000000033070002
9áâà9,9áâà10,9áâà11,9áâà12,9áâà13
7700000000033070003
9áâà14,9áâà15,9áâà16,10,10áâà1,10áâà2
7700000000033070004
14,14áâà1,14áâà2,14áâà3,15,15áâà2
7700000000033070005
7700000000033070006
15áâà8,15áâà9,15áâà10,15áâà11,15áâà14
7700000000033070007
7700000000033070008
7700000000033070009
15áâà24,15áâà25,15áâà26,15áâà27
7700000000033070010
7700000000033070011
15áâà32,15áâà33,15áâà34,16,16áâà1
7700000000033070012
7700000000033070013
16áâà7,16áâà14,19áâà1,19áâà2,19áâà3
7700000000033070014
19áâà4,19áâà5,19áâà6,19áâà7,19áâà8
7700000000033070015
19áâà9,19áâà10,19áâà11,19áâà12,19áâà13
7700000000033070016
7700000000033070017
7700000000033070018
19áâà22,19áâà23,19áâà24,19áâà25
7700000000033070019
19áâà26,19áâà27,19áâà28,19áâà29
7700000000033070020
19áâà30,19áâà31,19áâà32,19áâà33
7700000000033070021
19áâà34,19áâà35,19áâà36,19áâà37
7700000000033070022
19áâà39,19áâà40,19áâà41,19áâà42
7700000000033070023
19áâà43,19áâà44,19áâà45,19áâà46
7700000000033070024
19áâà47,19áâà48,19áâà49,19áâà50
7700000000033070025
19áâà51,19áâà52,19áâà53,19áâà54
7700000000033070026
19áâà55,19áâà56,19áâà57,19áâà58
7700000000033070027
19áâà59,19áâà60,19áâà61,19áâà62
7700000000033070028
19áâà63,19áâà64,19áâà65,19áâà66
7700000000033070029
19áâà67,19áâà69,19áâà70,19
7700000000033070030
4áâà1,4áâà4
7700000000033110001
2,4áâà1,4áâà2,4áâà6,4ª1,4ª2,4ª3,4ª4
7700000000033130001
4ª5,4ª7,4ª9,4ª10,4ª11,4ª12,4ª13,4ª14
7700000000033130002
4ª15,4ª17,4ª18,4ª20,4ª21,4,6,6áâà2
7700000000033130003
6áâà3,6áâà4,6áâà5,6áâà6,6áâà8,6áâà11
7700000000033130004
6áâà13,6áâà18,6áâà19,6,6áâà2,6áâà3
7700000000033130005
8,8áâà1,8ª2,8ª2áâà4
7700000000033130006
12,12,14,14áâà2,16,18ª1,18ª2,20
7700000000033130007
22áâà5,22ª1,22ª2,22ª3,22ª4,24,26ª1
7700000000033130008
26ª2,28ª1,28ª1áâà1,28ª3,30ª1,30ª2,32ª1
7700000000033130009
32ª1áâà1,32ª2,32ª3,32ª3áâà3,33_
7700000000033130010
33_áâà1,34,34ª2,35,36,37,37,37,38ª1
7700000000033130011
38ª1áâà1,38ª2,40áâà2,40áâà3,40áâà4
7700000000033130012
40ª1,40ª1áâà1,40ª1áâà5,40ª3,41,41áâà1
7700000000033130013
7700000000033130014
41áâà7,41áâà8,41áâà9,41áâà10,41áâà11
7700000000033130015
41áâà12,41áâà13,41áâà14,41áâà15,42/2
7700000000033130016
43áâà1,43áâà2,44,44áâà1,44áâà2,44áâà3
7700000000033130017
44áâà4,44áâà5,44áâà6,44áâà7,46,46áâà2
7700000000033130018
46áâà3,46áâà4,48,48áâà2,48áâà3
7700000000033130019
48ªáâà4,48áâà5,48áâà6,48áâà7,48áâà8
7700000000033130020
48áâà9,48áâà10,48áâà11
7700000000033130021
10,10áâà2
7700000000033130022
7700000000033140001
7700000000033160001
2áâà7,2áâà8,2áâà9,2áâà10,2áâà12,2áâà13
7700000000033160002
2áâà16,2áâà17,2áâà18,4áâà1,4áâà2,4áâà3
7700000000033160003
7700000000033160004
4áâà10,4áâà11,4áâà12,4áâà13,4áâà15
7700000000033160005
7700000000033160006
6áâà1,6áâà2,6áâà3,6áâà4,6áâà5,6áâà7
7700000000033160007
6áâà8,6áâà1,6áâà2,6áâà3,6áâà4
7700000000033160008
6áâà5,6áâà6,6áâà7,6áâà8,6áâà9
7700000000033160009
6áâà10,8áâà1,8áâà2,8áâà3,8áâà4,8áâà7
7700000000033160010
8áâà10,8áâà12,10áâà2,10áâà3,10áâà5
7700000000033160011
10áâà6,12,12áâà1,12áâà2,12áâà3
7700000000033160012
7700000000033160013
12áâà8,12áâà11,12áâà12,12áâà13
7700000000033160014
7700000000033160016
7700000000033160017
7700000000033160018
7700000000033160019
1áâà25,1áâà26,1áâà26,3áâà1,3áâà2
7700000000033160020
7700000000033160021
3áâà11,3áâà12,3áâà14,3áâà16,3áâà17
7700000000033160022
3áâà18,3áâà19,3áâà20,3áâà21,3áâà21
7700000000033160023
3áâà22,3áâà23,3áâà24,3áâà25,3áâà1
7700000000033160024
3áâà2,10áâà1,10áâà2
7700000000033160025
4,8/26,10,12,14
7700000000033180001
1,2áâà1,2áâà3,3,4áâà1,4áâà2,4,5/2,6
7700000000033220001
6,6,7/1,8,8ª1,11,11áâà1,11/1,14áâà1
7700000000033220002
14áâà2,15,15ª1,17,18,20,20áâà1,21
7700000000033220003
21áâà1,21áâà2,23,25,25áâà1,27,29
7700000000033220004
2,3,3áâà2,3,4,4áâà4,4áâà5,5áâà4,5ª1
7700000000033240001
5ª2,5ª3,5ª3áâà1,6,7,8ª1,8ª2
7700000000033240002
1áâà9,1ª1,1ª2,1ª2áâà1,1ª2áâà2,3,5,5,7
7700000000033250001
9,11,11áâà3,11áâà4,13,15,17,19
7700000000033250002
7700000000033250006
2ª1,2ª2,4,6,8,10,12
7700000000033250003
3áâà1,4,4áâà2,6,12,12ª1,14,16,18
7700000000033260001
17,17áâà1
7700000000033290001
1,1áâà1,1,1áâà1,2,2áâà2,2/1,2,3
7700000000033290002
7700000000033290003
3áâà7,3áâà8,3áâà10,4,5,5áâà2,7,7ª1
7700000000033290004
7ª1áâà1,8,9,10,11,12,13,13áâà1,13áâà2
7700000000033290005
13áâà3,13áâà4,14,15,16,18,20ª3,22áâà1
7700000000033290006
22áâà2,22áâà3,22ª2
7700000000033290007
29áâà1,29áâà2
7700000000033320001
10áâà1,10áâà2,10áâà3,10áâà5,10áâà7,14
7700000000033400001
1,1áâà1,2,3,4,4áâà2,6,7,8ª1
7700000000033460001
3,3áâà2,4áâà2,4ª1,4ª1áâà3,6ª2,12
7700000000033510001
1/4áâà2,1/4áâà3,12áâà1
7700000000033520001
4ª1,4ª2,4áâà1,6,6áâà3
7700000000033540001
7700000000033560001
4,6,10,10áâà1
7700000000033570001
8,10áâà1,10áâà2,10áâà4,11/9áâà1
7700000000033600001
11/9áâà2,11/9áâà3,11/9áâà4,11/9áâà5
7700000000033600002
11/9áâà6,11/9áâà7,11/9áâà8,11/9áâà9
7700000000033600003
11/9áâà10,11/9áâà13,13,13áâà7,13áâà8
7700000000033600004
7700000000033600005
7700000000033600006
15áâà10,15áâà11,15áâà13,15áâà14
7700000000033600007
1,2áâà1,4,6,7áâà1,7áâà2,7áâà3,7áâà4
7700000000033600009
7700000000033600010
7700000000033600011
7áâà16,7áâà17,7áâà18,9áâà1,9áâà2,9áâà3
7700000000033600012
9áâà4,9áâà5,9áâà6,9áâà7,9áâà12,9áâà13
7700000000033600013
9áâà14,9áâà15,9áâà16,9áâà17
7700000000033600014
2/19,3,4,6,6áâà1,9,9,9áâà1,9áâà2,11
7700000000033640001
11,12,13
7700000000033640002
3ª1,3ª1áâà1,3ª2,3ª3
7700000000033650001
5,6,6áâà1,7,8,9,9ª1,9ª2,9ª3,9ª4,10
7700000000033650002
10áâà1,11,12,13,13áâà1,13áâà2,13,14
7700000000033650003
15,15áâà1,16,16áâà1,17ª1,17ª2,17ª3,17
7700000000033650004
19,21,21ª2,23,25,25,25áâà1,27,29,29
7700000000033650005
31,33/23
7700000000033650006
7700000000033760001
7700000000033760002
1/4áâà9,1/4áâà10,1/4áâà10,1/4áâà11
7700000000033760003
1/4áâà12,1/4áâà13,1/4áâà15,1/4áâà15
7700000000033760004
1/4áâà16,1/4áâà17,1/4áâà17,1/4áâà19
7700000000033760005
1/4áâà20,1/4áâà21,1/4áâà24,1/4áâà26
7700000000033760006
1/4áâà26,1/4áâà27,1/4áâà28,1/4áâà29
7700000000033760007
1/4áâà30,1/4áâà31,1/4áâà33,1/4áâà33
7700000000033760008
1/4áâà33,1/4áâà33,1/4áâà33
7700000000033760009
1/4áâà33,1/4áâà35,1/4áâà38,1/4áâà39
7700000000033760010
1/4áâà43,1/4áâà44,1/4áâà47,1/4áâà49
7700000000033760011
1/4áâà52,1/4áâà53,1/4áâà54,1/4áâà55
7700000000033760012
1/4áâà56,1/4áâà58,1/4áâà61,1/4áâà62
7700000000033760013
1/4áâà63,1/4áâà66,1/4áâà68,1/4áâà69
7700000000033760014
1/4áâà70,1/4áâà72,2áâà1,2áâà2,2áâà3
7700000000033760015
7700000000033760016
2áâà10,2áâà11,2áâà12,2áâà13,2áâà14
7700000000033760017
2áâà1,2áâà2,2áâà3,2áâà5,2áâà7
7700000000033760018
2áâà8,2áâà9,2áâà10,2áâà15,2áâà16
7700000000033760019
2áâà17,2áâà18,3,3áâà1,3áâà2,3áâà3
7700000000033760020
3áâà7,3áâà8,3áâà9,3/7áâà11,3áâà1,4
7700000000033760021
4áâà1,4áâà2,5áâà1,5áâà2,5áâà4,5áâà5
7700000000033760022
5áâà6,5áâà7,5áâà8,5áâà9,6áâà1,6áâà2
7700000000033760023
7700000000033760024
7700000000033760025
7700000000033760026
7áâà13,8,8áâà2,8áâà3,8áâà4,8áâà5,8áâà7
7700000000033760027
7700000000033760028
8áâà13,9áâà1,9áâà2,9áâà3,9áâà4,9áâà5
7700000000033760029
9áâà6,9áâà7,11áâà1,11áâà2,11áâà3
7700000000033760030
7700000000033760031
1/4áâà32,1/4áâà32,1/4áâà32,1áâà1
7700000000033760032
1áâà1,2áâà1,4áâà1,4áâà2,4áâà3,4áâà4
7700000000033760033
4áâà11,4áâà12,4áâà13,4áâà14,4áâà1
7700000000033760034
4áâà2,4áâà3,4áâà4,4áâà5,4áâà6
7700000000033760035
4áâà7,4áâà8
7700000000033760036
7700000000033770001
2,2ª1,2ª2,2ª3,2ª3áâà1,2ª4,2ª5,2ª6,2ª7
7700000000033830001
4,4ª1,4ª2,4ª3,6áâà1,6áâà2,8,12,12áâà2
7700000000033830002
7700000000033880001
1áâà1,2áâà1,2áâà2,3,5áâà1,5áâà2,5áâà3
7700000000033980001
7700000000033980002
7700000000033980003
7700000000033980004
7700000000033980005
7700000000033980006
7700000000033980007
7700000000033980008
5áâà40,5áâà41,5áâà42,5áâà43,5áâà44
7700000000033980009
5áâà45,5áâà46,5áâà47,5áâà48,5áâà49
7700000000033980010
5áâà50,5áâà51,5áâà52,5áâà53,5áâà54
7700000000033980011
5áâà55,5áâà56,5áâà57,5áâà58,5áâà59
7700000000033980012
5áâà60,5áâà61,5áâà62,5áâà63,5áâà64
7700000000033980013
5áâà65,5áâà66,5áâà67,5áâà68,5áâà1
7700000000033980014
5áâà2,8áâà1,8áâà2,9áâà1,9áâà2,9áâà3
7700000000033980015
11áâà1,11áâà1,13áâà1,15,24áâà1,24áâà2
7700000000033980016
24áâà3,24áâà4,24áâà6,24áâà7,24áâà8
7700000000033980017
24áâà9,24áâà11,24áâà12,24áâà13,24áâà14
7700000000033980018
7700000000033980019
24áâà19,24áâà20,24áâà21,24áâà22
7700000000033980020
24áâà23,24áâà25,24áâà26,24áâà27
7700000000033980021
24áâà28,24áâà29,24áâà30,24áâà31,24áâà32
7700000000033980022
2ª1,2,2,3áâà1,3áâà2,3ª1,3ª2,3ª3,3ª4
7700000000034040001
3ª5,3ª6,3ª7,7áâà1,7áâà2,7ª1,7ª2,7ª3
7700000000034040002
7ª4,7ª5,7ª6,7ª7,9ª1,10,11áâà1,11ª1
7700000000034040003
11ª2,11ª3,11ª4,11ª5,11ª6,11ª7,11áâà1
7700000000034040004
3áâà1,6áâà2,6áâà3,8áâà1,8áâà2,8áâà3
7700000000034060001
8áâà4,8áâà5,8áâà7,8áâà10,8áâà12,8áâà15
7700000000034060002
8áâà18,8
7700000000034060003
3,3áâà1,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000034110001
3áâà6,3áâà7,3áâà8,3áâà9,3áâà10,3áâà12
7700000000034110002
3áâà13,3áâà14,3áâà15,3áâà16,13áâà1
7700000000034110003
2,2áâà1,2ª1,2ª1áâà2,2ª1áâà3,2ª1áâà4
7700000000034270001
2ª2,3,4,4áâà2,5,7ª1,7ª2,7ª3,7ª4
7700000000034270002
2áâà5,2áâà6,4áâà1,4áâà4,6áâà1,6áâà2
7700000000034280001
6áâà3,6áâà4,6áâà7,8,8,14,16,16áâà1
7700000000034280002
16áâà2,16áâà3,16áâà4,16áâà5,18,18áâà1
7700000000034280003
18áâà2,18áâà3,18áâà4,18
7700000000034280004
1áâà1,1áâà2,1,3áâà1,3áâà2,3áâà7,10
7700000000034310001
7700000000034310002
6áâà1,6áâà2,6áâà3,6áâà6,6áâà11,6áâà13
7700000000034320001
6áâà16,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5
7700000000034320002
8áâà6,8áâà7,9áâà1,9áâà2,9áâà3,9áâà4
7700000000034320003
9áâà5,10áâà3,10áâà4,10áâà7,10áâà8
7700000000034320004
10áâà9,12áâà1,12áâà2,14,14áâà1,15
7700000000034320005
15áâà6,16,19,25,25áâà1,25áâà2,25áâà3
7700000000034320006
25áâà4,25áâà5,41áâà1,41áâà2,41áâà3
7700000000034320007
41áâà5,41áâà6,41áâà7,41áâà8,41áâà9
7700000000034320008
41áâà10
7700000000034320009
4,4áâà1,4áâà2,4áâà3,4áâà4,8,8áâà1
7700000000034330001
8áâà3,8áâà4,8áâà5,8áâà6,8áâà7,8áâà8
7700000000034330002
7700000000034330003
8áâà14,8áâà15,8áâà16,8áâà17
7700000000034330004
2,3,4ª1,4ª2,4ª3,5ª1,5ª2,6ª1,6ª2,7,8/4
7700000000034340001
9ª1,9ª2,11ª2
7700000000034340002
1,1áâà1,3,5,5áâà2,5áâà3,7,7ª1,7ª1áâà1
7700000000034380001
9,11,13,13áâà1
7700000000034380002
18ª1,18ª2,18ª3,20ª1,20ª1áâà4,20ª2
7700000000034380003
20ª2áâà1,22ª1,22ª2,24ª1,24ª2,26ª1,26ª2
7700000000034380004
26ª2áâà1,26ª2áâà2,28ª1,28ª2,28ª2áâà1
7700000000034380005
35ª1,37,37ª1,37ª1áâà1,39,39áâà1,39áâà2
7700000000034380006
39ª1,41,41ª2,41ª2áâà1,43,43áâà1,43áâà2
7700000000034380007
43ª1,43ª2,45ª1,45ª1áâà2,45ª2,47,47áâà1
7700000000034380008
47ª1,47ª1áâà2,47ª2,49,49ª1,49ª2
7700000000034380009
6ª1,6ª2,6ª3,8,8áâà2,10,10áâà1,12
7700000000034380010
12áâà2,14ª1,14ª2,16ª1,16ª2
7700000000034380011
15,15áâà2,17,17áâà2,17ª1,19ª1,19ª2,21
7700000000034380012
21áâà2,23,23áâà1,25,29,29áâà3
7700000000034380013
2,2ª1,2ª1áâà2,2ª2,2ª3,2ª3áâà1,2ª3áâà3
7700000000034380014
2ª5,4,4ª1,4ª2,4ª3,4ª3áâà2,4ª4,4ª4áâà1
7700000000034380015
4ª5áâà1,4ª5áâà8,4ª6
7700000000034380016
7700000000034390001
1,1/29áâà1,1/29áâà2,1/29áâà3,1ª3,3
7700000000034400001
3áâà1,5,7,7áâà2,29,29áâà1,29áâà2
7700000000034400002
29áâà4,29áâà5,29áâà6,29áâà7,29áâà8
7700000000034400003
29áâà8,29áâà9,29áâà10,29áâà13,29áâà16
7700000000034400004
29,39áâà1,39áâà2
7700000000034400005
7700000000034460001
7700000000034470001
7700000000034510001
ª1,ª2,ª3,ª4,ª5
7700000000034530001
1/6
7700000000034550001
3,4,4áâà2,4áâà4,7áâà1,7áâà7,7áâà16
7700000000034600001
7áâà17,9,9áâà1,9áâà4,12ª1,12ª2,12ª3
7700000000034600002
4áâà1,4áâà2,4áâà3,4áâà3,4áâà4,4áâà5
7700000000034620001
7700000000034620002
7700000000034620003
4áâà19,4áâà21,4áâà22,4áâà23,4áâà24
7700000000034620004
4áâà25,4áâà28,4áâà29,4áâà30,4áâà31
7700000000034620005
4áâà32,4áâà33,4áâà34,4áâà35,4áâà36
7700000000034620006
4áâà37,4áâà40,4áâà41,4áâà43,4áâà45
7700000000034620007
4áâà49,4áâà52,5áâà1,5áâà2,5áâà3,5áâà4
7700000000034620008
7700000000034620009
5áâà11,5áâà12,5áâà13,5áâà14,5áâà15
7700000000034620010
5áâà16,5áâà17,5áâà18,5áâà19,5áâà1
7700000000034620011
6áâà1,6áâà2,6áâà3,6áâà4,6áâà6,6áâà7
7700000000034620012
6áâà8,6áâà10,6áâà11,6áâà12,6áâà13
7700000000034620013
7700000000034620014
6áâà19,6áâà20
7700000000034620015
7700000000034760001
7700000000034760002
7700000000034760003
5áâà19,5áâà36,5áâà39,5áâà44,5áâà45
7700000000034760004
7700000000034760006
2,3áâà2,3áâà4,3áâà5,4áâà3,4áâà6,4
7700000000034770001
4áâà1,5,6ª1,6ª2,6ª3,7,10áâà1,22áâà1
7700000000034770002
22ª1,22áâà1,24,26áâà1,28,40áâà1
7700000000034770003
1áâà1,1áâà2,1_,1_áâà1,1_áâà2,3_,3
7700000000034860001
3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000034860002
3áâà6,3áâà7,3áâà8,3áâà9,3áâà10
7700000000034860003
3áâà11,3áâà12,3áâà13,3áâà14
7700000000034860004
3áâà15,4,4ª1,4,10,16,18ª1
7700000000034860005
ª208,ª409áâà1,ª409áâà2,ª805,ª805áâà2
7700000000034970001
ª806,ª809,ª809,ª810,ª811,ª812,ª813
7700000000034970002
ª814,ª823,ª823áâà4,ª823,1ª1,1ª1áâà1
7700000000034970003
1,1ª1,2ª201,2ª202,2ª203,2ª204,2ª205
7700000000034970004
2ª206,2ª207,2,3ª,3ª,3ª,4ª401,4ª402
7700000000034970005
4ª403,4ª404,4ª405,4ª406,4ª407,4ª408
7700000000034970006
4ª408,4ª409,4,4áâà2,4áâà3,4áâà5
7700000000034970007
4áâà6,4,4áâà2,4áâà3,5,5ª,5ª,5ª
7700000000034970008
5ª,5,5áâà2,6ª601,6ª602,6ª603,6ª604
7700000000034970009
6ª605,6ª606,6ª607,6ª608,7ª,7ª,7ª
7700000000034970010
1/2áâà2,1/2áâà5,1/2áâà6,1/2áâà9
7700000000034980001
1/2áâà10,1/2áâà12
7700000000034980002
12,15,23,29
7700000000034980003
1,1áâà3,3,3ª2,3ª3,3ª3áâà2,3ª3áâà4,5,9
7700000000034980004
7700000000034980005
9,10,11,14áâà1,14áâà2,14áâà3,14áâà5
7700000000035000001
4ª1,72áâà11,72ª1,72ª2,72ª3,72ª4,72ª5
7700000000035020001
72ª6,72ª7,72ª8
7700000000035020002
1,1áâà2,1áâà3,1áâà4,1,1,2,4
7700000000035030001
1,2,2áâà2,2áâà3,6,6áâà2,6ª2áâà1
7700000000035060001
6ª2áâà2,6ª3,6ª4áâà1,6,8áâà1,8áâà2
7700000000035060002
8áâà3,8áâà4,8áâà5,8áâà6,8áâà7,8áâà9
7700000000035060003
8áâà12,8áâà16,8áâà18,8áâà23
7700000000035060004
3_5áâà1,3_5áâà2,3_5áâà4,3_5áâà6,6áâà1
7700000000035070001
6áâà2,6áâà3,7_21,7_21áâà2,19,20áâà1
7700000000035070002
20áâà2,20áâà3,20áâà4,21,21áâà3,21áâà4
7700000000035070003
23áâà1,23áâà3,23áâà4,23áâà5,23áâà6
7700000000035070004
25áâà3,25áâà7,25áâà8,27,28_30ª1
7700000000035070005
28_30ª2,31/35,32áâà1,32áâà2,36áâà1
7700000000035070006
37_41ª,38áâà1,43_45,46áâà1,46áâà2
7700000000035070007
46áâà3,46áâà4,46áâà6,46áâà10,47áâà1,49
7700000000035070008
49áâà4,51áâà1,51áâà2,53
7700000000035070009
56áâà1,56áâà2,56áâà3,56áâà4,56áâà5
7700000000035070010
56áâà6,56áâà7,56áâà8,56áâà9,58áâà1
7700000000035070011
58áâà2,58áâà3,60,62,63áâà1,63áâà2
7700000000035070012
64áâà1,64áâà1,64áâà4,64áâà7,64áâà19
7700000000035070013
64áâà20,72áâà1,75áâà3,75áâà5,75áâà9
7700000000035070014
75áâà10,75áâà11,75áâà17,75áâà20
7700000000035070015
75áâà21,75áâà28,79áâà1,79áâà2,79áâà3
7700000000035070016
2,2ª1,2ª2,2ª3,6,6ª2,6ª2áâà1,6ª3,8,8áâà1
7700000000035200001
1,1áâà1,1ª1,1ª1áâà1,3,3áâà1,3áâà2,5,7
7700000000035200002
7ª1,7ª2,7ª4,9,9ª1,9ª1áâà2,9ª2,9ª2áâà1
7700000000035200003
11,11áâà1,11ª1,11ª2,13,13áâà1
7700000000035200004
1,1ª1,1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000035210001
2áâà6,2áâà7
7700000000035210002
3,55ª2
7700000000035240001
123627
2,2áâà1,4,6,8,8áâà1,8ª1,8ª1áâà1,10
7700000000035240002
10ª1,10ª2,12,12áâà1,12ª1,12ª1áâà1,12ª2
7700000000035240003
14,14ª1,14ª2,14ª2áâà1,14ª3,16
7700000000035240004
40,40ª1,40ª2,42,42áâà1,42ª1,42ª2,42ª3
7700000000035240005
42ª4,44,44áâà1,44ª1,46,47,49,50,50áâà1
7700000000035240006
51,53,57
7700000000035240007
11,13,13áâà1,13áâà2,15,15áâà1,15ª1,17
7700000000035240008
17ª1,18,19,19áâà1,20,20áâà1,20áâà2
7700000000035240009
20ª1,21,21áâà1,21ª1,21ª2,21ª3,22ª1
7700000000035240010
22ª2,22ª2áâà1,23,23ª1,25ª1,25ª1áâà1
7700000000035240011
25ª2,25ª2áâà1,25ª3,25ª4,25ª5,26,26áâà1
7700000000035240012
26ª1,27,27áâà2,28,29,29áâà1,29ª1,30
7700000000035240013
30ª1áâà1,31áâà1,32,32ª1,32ª2,33,33ª1
7700000000035240014
33ª1áâà1,33ª1áâà2,34,34áâà1,34ª1,36,38
7700000000035240015
39,39áâà1,39áâà2,41ª2
7700000000035240016
7700000000035260001
1áâà7,1áâà1,1áâà2,1áâà3,1áâà4
7700000000035260002
7700000000035260003
1áâà10,1áâà12,2áâà1,7áâà1,7áâà2,7áâà3
7700000000035260004
2,2áâà1
7700000000035260005
7700000000035270001
59áâà1,59áâà2,91,91áâà2,91áâà3
7700000000035280001
84,84áâà2,84áâà3,128
7700000000035280002
2,2,3,5,19
7700000000035290001
17,17áâà2,20
7700000000035300001
7700000000035330001
1,3,4ª1,4ª2,4ª2áâà3,5áâà1,6,6ª2,8
7700000000035340001
8áâà2,8ª2,8ª2áâà2,10ª1,10ª2,11,11áâà2
7700000000035340002
11áâà3,11áâà5,11áâà6,12,18,20ª1,20ª1,22
7700000000035340003
3,4,5,7,7
7700000000035360001
7700000000035390001
4,11áâà1
7700000000035390002
5áâà1
7700000000035430001
1áâà1,1áâà2,1áâà3,1áâà4
7700000000035450001
2,2áâà,2áâà,2áâà5,2áâà6,2áâà7,2áâà8
7700000000035480001
2áâà11,2áâà12,2áâà30,2áâà42,2áâà44
7700000000035480002
2áâà53,2áâà58,2áâà61,2áâà62,2áâà63
7700000000035480003
2áâà64,2,2áâà1,2áâà2,2,4,4áâà1,4
7700000000035480004
6,6áâà4,8,8áâà1
7700000000035480005
6,8,8áâà1
7700000000035530001
7700000000035560001
17,17áâà2,17áâà3,17áâà4,17áâà5
7700000000035590001
17áâà6
7700000000035590002
ª1,ª2,ª3,ª3áâà2,ª4,ª4áâà2,ª5,ª6,ª6áâà1
7700000000035640001
ª6,ª7,ª8,ª9,ª10,ª11,ª12,ª12,ª13
7700000000035640002
ª13áâà1,ª15
7700000000035640003
7,7áâà1,7áâà6
7700000000035670001
9,9áâà2,9áâà3,9áâà5,9áâà6,9áâà7,9áâà10
7700000000035710001
9áâà11,9/7áâà8,9/7áâà9,11áâà2,11áâà3
7700000000035710002
7700000000035710003
11áâà10,11áâà11,11áâà15,11áâà18
7700000000035710004
11áâà19,11áâà20,11áâà21,11áâà22,11ª1
7700000000035710005
11ª1áâà2,11ª2,11ª2áâà1,11ª2áâà2,12
7700000000035710006
7700000000035710007
12áâà7,12áâà8,15,15áâà2,15áâà3,15áâà4
7700000000035710008
15áâà6,15,15áâà1,15áâà2,15áâà3,15
7700000000035710009
15áâà3,15áâà4,15áâà5,15áâà7
7700000000035710010
15áâà8,15áâà9,18áâà1,18áâà2,18áâà3
7700000000035710011
18áâà4,18áâà5,20,20áâà2,20áâà3,20áâà4
7700000000035710012
20áâà5,20áâà6,20áâà8,20áâà11,20áâà13
7700000000035710013
20áâà22,20áâà25,20áâà26,20áâà28
7700000000035710014
20áâà31,20áâà45,21áâà1,21áâà2,21áâà3
7700000000035710015
21áâà4,21áâà5,21áâà16,21áâà17,21,21,22
7700000000035710016
1ª1,3,3áâà2,5,5áâà2,5áâà4,5áâà5
7700000000035720001
7700000000035740001
7700000000035750001
7700000000035770001
3áâà7,3áâà9,3áâà10,3áâà11,3áâà1
7700000000035770002
3áâà2,3áâà3,3áâà4,3áâà5,5,5
7700000000035770003
7700000000035770004
7700000000035770005
6áâà12,6áâà13,6áâà14,6áâà15
7700000000035770006
6áâà16,6áâà20,7,8áâà1,8áâà2,8áâà3
7700000000035770007
8áâà5,8áâà7,9,11,11áâà2
7700000000035770008
35,35ª1,35ª2,37,37áâà1,39,41,41áâà2
7700000000035820001
41ª2,41ª3,41ª4,43,43áâà1,45áâà1,55
7700000000035820002
55áâà1,55áâà2,55áâà3,55áâà4,55áâà5
7700000000035820003
55áâà6,55áâà10,55áâà11,55ª5
7700000000035820004
28,34/29,34/29áâà1,36,38,38áâà1,38áâà2
7700000000035820005
38ª1,40,40ª1,40ª2,40ª3,44,46,48ª1
7700000000035820006
48ª1áâà1,50
7700000000035820007
6,6
7700000000035830001
7700000000035840001
21,27
7700000000035850001
4áâà2,6
7700000000035860001
1,2ª2,5,6/11,8,8áâà2,8ª2,9,9áâà2,10/6
7700000000035910001
13,14,15,16,18/8,20áâà1,22áâà1,22áâà2
7700000000035910002
22áâà3,22áâà5
7700000000035910003
23,23ª2,25,25áâà2,26,27,28ª1,28ª2,30ª1
7700000000035910004
7700000000035910005
31,31ª1,33áâà1,33áâà2,33áâà3,33ª1,36ª1
7700000000035910006
36ª2,36ª2áâà1,36ª3,38,40ª1,40ª2
7700000000035910007
6,8áâà1,8áâà2,8áâà3,8áâà4,8áâà5,8áâà6
7700000000035930001
2,4,4áâà2,4áâà3,4áâà4,4áâà6,4áâà7
7700000000035950001
4áâà8,4áâà10,4áâà11
7700000000035950002
7700000000035970001
1,1áâà1
7700000000035970002
7700000000036000001
2áâà1,2áâà2,2áâà3,2áâà4,2áâà1,2áâà2
7700000000036070001
7700000000036070002
2áâà1,2áâà2,2áâà3,2áâà1,2áâà2
7700000000036070003
2áâà3,11,11áâà2,11áâà3,11áâà4,11áâà5
7700000000036070004
11ª2,11ª3,11ª4,13
7700000000036070005
2,2ª1,4,5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000036080001
5áâà8,5áâà11,5áâà13
7700000000036080002
7700000000036110001
7,11,11áâà2,11áâà3,11áâà4,11áâà5
7700000000036120001
7700000000036140001
7700000000036160001
7700000000036160002
1áâà7
7700000000036180001
9,12áâà1,12áâà2
7700000000036200001
3áâà1,4_10áâà1,9/1áâà1
7700000000036200002
2/1áâà1,2/1áâà2,3,4,7áâà1
7700000000036220001
7700000000036250001
1áâà7,1áâà8,1áâà9,1áâà57,1áâà58,1áâà59
7700000000036250002
1áâà60,2,2ª1,2ª2,2ª3,2ª3áâà3,2ª4
7700000000036250003
2ª4áâà1,2ª5,2,2áâà1,4,4ª1,4ª2
7700000000036250004
4ª2áâà1,4ª3,4ª4,4ª4áâà3,4,4áâà1
7700000000036250005
6,6,8,8áâà1,8,10ª1,10ª2,10ª3,12ª1
7700000000036250006
12ª1áâà1,12ª2,12ª3,14,14áâà1,14,16,18
7700000000036250007
18,20,20áâà2,22áâà1,22áâà2
7700000000036250008
1áâà3,3áâà4,5,7
7700000000036390001
61,80
7700000000036420001
2,2áâà1,2áâà2,3,31
7700000000036420002
11,11áâà1,11áâà2,11áâà7
7700000000036450001
1/47áâà1
7700000000036460001
7700000000036480001
2áâà7,2áâà8,2áâà16,4áâà1,4áâà3,4áâà5
7700000000036480002
4áâà12
7700000000036480003
1áâà1,2,3,4áâà1,5,5áâà2,6,7,7áâà3,7ª1
7700000000036500001
2,10,12áâà1,12áâà2,12,14áâà1,14áâà2
7700000000036510001
7700000000036510002
14áâà9,14áâà10,14áâà11,16,31,41áâà1
7700000000036510003
7700000000036530001
7700000000036540001
2,2áâà1,2áâà2,4áâà4
7700000000036550001
7700000000036570001
2áâà7,2áâà10,2áâà12,2ª1,2,3,3áâà2
7700000000036570002
3áâà3,3áâà4,3áâà5,3ª1,3ª1áâà2,3ª1áâà3
7700000000036570003
3,5,5áâà3,5áâà4,5áâà6,5áâà7,5áâà8
7700000000036570004
5áâà9,5áâà10,7áâà1,7áâà2,7áâà3,7áâà4
7700000000036570005
7áâà5,7áâà6,7áâà7,7áâà8,7áâà10,12
7700000000036570006
7700000000036570007
12áâà7,12,12áâà2,12áâà3
7700000000036570008
7700000000036680001
7áâà3,8,12,12áâà2,12áâà3,12áâà4,15
7700000000036680002
15áâà1,16,17,17áâà1,20áâà1,25,25áâà2
7700000000036680003
25áâà3,25áâà4,28,28áâà1,28áâà2,32,36
7700000000036680004
7700000000036690001
áâà1,áâà2,1,1áâà2,1áâà3,1áâà4,1áâà5
7700000000036710001
1áâà6,1áâà16,1áâà17,1áâà25,1,1áâà2
7700000000036710002
1,1áâà1,1áâà2,1áâà3,1áâà4,2,2áâà2
7700000000036710003
2áâà3,2áâà4,2áâà3,3áâà1,3áâà3,3áâà4
7700000000036710004
7700000000036710005
3áâà11,3áâà12,3áâà13,3áâà14,3áâà15
7700000000036710006
3áâà16,3áâà16,3áâà16,3áâà16,3áâà17
7700000000036710007
3áâà19,3áâà20,3áâà21,3áâà22,3áâà23
7700000000036710008
3áâà24,3áâà26,3áâà35,4,4áâà1,4áâà2
7700000000036710009
7700000000036710010
4áâà10,4áâà12,4áâà14,4áâà15,4áâà16
7700000000036710011
4áâà17,4áâà19,4áâà20,4áâà21,4áâà22
7700000000036710012
7700000000036710013
7700000000036710014
4áâà33,4áâà35,5,5áâà2,6,6áâà2,6áâà3
7700000000036710015
7700000000036710016
6áâà11,6áâà12,6áâà13,6áâà30,6áâà1
7700000000036710017
6áâà2,6áâà3,6áâà4,7,7áâà2,7áâà3
7700000000036710018
7700000000036710019
7áâà10,7áâà12,7áâà13,7áâà14,7áâà17,8
7700000000036710020
8áâà2,8áâà3,8áâà4,8áâà5,9áâà1,9áâà2
7700000000036710021
9áâà3,12,12áâà1,12áâà2,12,12áâà2
7700000000036710022
12áâà3,12áâà4,12áâà5,13,13áâà1
7700000000036710023
7700000000036710024
1áâà1,1áâà2,1áâà1,1áâà2,1áâà3,1
7700000000036720001
7700000000036720002
1áâà7,1áâà8,3,3áâà3,3áâà4,3áâà5
7700000000036720003
3áâà6,3áâà7,3ª1,4,4áâà2,4áâà3
7700000000036720004
4áâà4,5,5áâà1,5áâà3,5áâà4,5áâà5,5áâà6
7700000000036720005
5áâà7,5áâà9,5áâà11,5áâà13,5,5,6áâà1
7700000000036720006
6áâà2,6áâà3,6áâà4,6áâà6,6áâà7,6áâà8,12
7700000000036720007
7700000000036720008
12áâà7,12áâà8,12áâà9,12áâà10,13,13áâà2
7700000000036720009
7700000000036720010
13áâà8,13áâà9,13áâà10,15,15áâà2,15áâà3
7700000000036720011
15áâà4,15ª1,15ª1áâà2,16áâà1,16áâà2
7700000000036720012
2,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6
7700000000036720013
7700000000036730001
1áâà8,1áâà10,1áâà14,1áâà14,1áâà16
7700000000036730002
1áâà18,1áâà18,1áâà19,1áâà19,1áâà27
7700000000036730003
1áâà28,1áâà29,1áâà31,1áâà32,1áâà33
7700000000036730004
7700000000036730005
1áâà42,1áâà43,1áâà44,1áâà45,1áâà46
7700000000036730006
1áâà47,1áâà50,1áâà51,1áâà60,1áâà64
7700000000036730007
1áâà96,1áâà97,1áâà98,1áâà99,1,2
7700000000036730008
2áâà6,2áâà8,2áâà9,2áâà11,2áâà12
7700000000036730009
2áâà13,2áâà14,3,3áâà1,3áâà3,3áâà4
7700000000036730010
5áâà1,5áâà2,5áâà4,5áâà6,5áâà7,6,6áâà3
7700000000036730011
6áâà4,6áâà5,6áâà6,6áâà7,6,6áâà1
7700000000036730012
7700000000036730013
6áâà2,6áâà3,6áâà4,12,12áâà2,12áâà3
7700000000036730014
12áâà1,12áâà3,12áâà6,12áâà7,12áâà8
7700000000036770001
12áâà9
7700000000036770002
7700000000036800001
1,1áâà1,1áâà3,1áâà4
7700000000036810001
7700000000036910001
1,1áâà1,8,16áâà1,16áâà2,16áâà3,16áâà4
7700000000036940001
16áâà5,16áâà7,16áâà8,16áâà9,16,22
7700000000036940002
2áâà1,2áâà2,4,6,6áâà2,11,13
7700000000036960001
1,1áâà1,1,1,1,1,1,2,3áâà1
7700000000036990001
3áâà2,4,6,6áâà1,8,8áâà1,8áâà2,8áâà3
7700000000036990002
8áâà4,8áâà5,8áâà6,8áâà7,12,14áâà1
7700000000036990003
1,1áâà2,1,2áâà1,2áâà1,4áâà1,5áâà1
7700000000037080001
5áâà2,5áâà3,7áâà1,7áâà2,7áâà3,7áâà4
7700000000037080002
7700000000037100001
7700000000037100002
4,4áâà1,4áâà2,4áâà3,4áâà4
7700000000037140001
7700000000037160001
38áâà6,38áâà7,38áâà8,38áâà9,44áâà1
7700000000037160002
9áâà1,11áâà1,15,15áâà1,15ª1áâà1
7700000000037160003
15ª1áâà2,15ª1áâà3,19,21áâà1,23ª1,23ª2
7700000000037160004
23ª3,23ª4,23ª5,23ª6,23ª7,23ª8,23ª9
7700000000037160005
23ª10,23ª11,23ª12,23ª13,23ª14,23ª15
7700000000037160006
23ª16,23ª17,23ª18,23ª19,23ª20
7700000000037160007
23ª20áâà1,23ª21,23ª23,23ª25,23ª27
7700000000037160008
23ª29,23ª31,23ª33,23ª35,23ª37
7700000000037160009
7700000000037190001
8áâà7,8áâà9,8áâà10
7700000000037190002
1ª2,1ª2áâà2,1ª2áâà3,1ª2áâà4,1ª2áâà5
7700000000037200002
7áâà4,7áâà5,7áâà7,7áâà8,7áâà9,7áâà10
7700000000037200003
7áâà11,7áâà12,8,8áâà2,8áâà3,8áâà4
7700000000037200004
7700000000037200005
8áâà11,8áâà12,8áâà13,8áâà15,8áâà20,9
7700000000037200006
9áâà2,9áâà3,9áâà4,9áâà8,9ª1,9ª1áâà2
7700000000037200007
9ª2,9ª2áâà1,9ª2áâà3,9ª2áâà4,9ª2áâà5
7700000000037200008
9ª2áâà6,9ª2áâà7,11ª2,11ª2áâà2,11ª2áâà3
7700000000037200009
11ª2áâà4,11ª2áâà5,11ª2áâà6,11ª2áâà7
7700000000037200011
11ª2áâà9,11ª2áâà10,11ª2áâà11,11ª2áâà12
7700000000037200012
11ª2áâà13,11ª2áâà14,11ª2áâà15
7700000000037200013
11ª2áâà16,11ª2áâà17,11ª2áâà18,11ª2áâà19
7700000000037200014
2ª1,2ª1áâà2,2ª2,3ª1,4,6
7700000000037280001
6,8,8áâà2,8áâà3,10,10áâà2,10,12
7700000000037320001
2,2áâà2,3áâà2,3áâà3,3áâà4,3áâà5,3áâà6
7700000000037340001
7700000000037340002
3áâà13,5,6,6áâà3,6áâà4,6áâà5,6áâà6
7700000000037340003
6áâà8,6áâà9,6áâà10,6áâà13,6áâà17,7áâà1
7700000000037340004
7700000000037340005
7700000000037340006
7áâà13,7áâà14,7áâà15,7áâà16,7áâà17,10
7700000000037340007
10áâà2,10áâà3,10áâà4,10áâà6,10áâà10
7700000000037340008
10áâà12,10áâà13,10áâà16,10áâà17
7700000000037340009
10áâà20,10áâà21,10áâà24,10áâà25
7700000000037340010
10áâà27,10áâà29,10áâà30,10áâà35
7700000000037340011
10áâà38,10áâà39,10áâà40,10áâà42
7700000000037340012
10áâà43,10ª1,10ª1áâà2,10ª2,10ª2áâà2
7700000000037340013
10ª2áâà3,10ª2áâà4,10,10,10áâà5,12
7700000000037340014
12áâà1,12áâà4,12ª1,12ª1áâà2,12ª1áâà3
7700000000037340015
12ª1áâà4,12ª1áâà7,12ª1áâà8,12ª1áâà9
7700000000037340016
12ª1áâà10,12ª1áâà11,12ª1áâà12,12ª2
7700000000037340017
12ª2áâà2,12ª2áâà3,12ª2áâà4,12ª2áâà6
7700000000037340018
12ª2áâà8,12ª2áâà20,12ª2áâà22,12ª2áâà24
7700000000037340019
12ª2áâà25,12ª2áâà27,12ª3,12ª3áâà2
7700000000037340020
12ª3áâà3,12ª3áâà4,12ª3áâà5,12ª3áâà6
7700000000037340021
12ª3áâà7,12ª3áâà8,12ª3áâà9,12ª3áâà10
7700000000037340022
12,12áâà2,12áâà3,12áâà5,12áâà6
7700000000037340023
12áâà7,12áâà8,12,12áâà2,12áâà3
7700000000037340024
12áâà4,12,12áâà2,12áâà3,12áâà5
7700000000037340025
12áâà6,12áâà7,12áâà13,12áâà14
7700000000037340026
12áâà15,12áâà16,12áâà17,12áâà18,12
7700000000037340027
8,8áâà1,8áâà2,8áâà6,8áâà7,8áâà8,8áâà10
7700000000037360001
8áâà11,8áâà14,8áâà16,8áâà18,9,10
7700000000037360002
7700000000037360003
10áâà2,10áâà9,11áâà1,11áâà2,13,15,16
7700000000037360004
7700000000037400001
1,1áâà1,1áâà2,1áâà3,1áâà5,2,2áâà1
7700000000037410001
2áâà2,2áâà3,2áâà4,2áâà6,2áâà7,2áâà8
7700000000037410002
7700000000037410003
2áâà14,2áâà17,2áâà21,2áâà22,2áâà23
7700000000037410004
2áâà24,2áâà26,2áâà27,2áâà28,2áâà33
7700000000037410005
2áâà51,2áâà52,2áâà53,2áâà55,2áâà56
7700000000037410006
2áâà57,2áâà58,2áâà59,2áâà60,2áâà60
7700000000037410007
7700000000037410008
4,4áâà1,4áâà2,4áâà3,4áâà5,4áâà6,4áâà7
7700000000037430001
7700000000037430002
4áâà15,4áâà16,4áâà17,4áâà18,6áâà1
7700000000037430003
7700000000037430004
7700000000037430005
6áâà20,6áâà22,6áâà23,6áâà24,6ª2áâà5
7700000000037430006
6ª2áâà7,6ª2áâà8,6ª2áâà9,6ª2áâà10
7700000000037430007
6ª2áâà11,6ª2áâà12,6ª2áâà13,6ª2áâà14
7700000000037430008
6ª2áâà16,6ª2áâà17,6ª2áâà18
7700000000037430009
2ª1,2ª1áâà2,4,4áâà2,4áâà3,4,4áâà1,4
7700000000037450001
5,6,6áâà1,6áâà2,6áâà3,6áâà4,6áâà6,10
7700000000037450002
5,6
7700000000037460001
7700000000037570002
1,1áâà1,2áâà1,3áâà1,3áâà2,3áâà3,5
7700000000037650001
1ª,1ª,1ª,1ª,1áâà1,1áâà2,1áâà3
7700000000037690001
7700000000037690002
1áâà10,1áâà11,1áâà12,3,8,8áâà2,8áâà3,8ª5
7700000000037690003
24,24áâà2
7700000000037730001
7700000000037830001
1áâà7,1áâà8,1áâà9,1áâà11,1áâà12,1áâà13
7700000000037830002
7700000000037830003
7700000000037830004
1áâà24,1áâà25,1áâà26,1áâà27,3,3áâà1
7700000000037830005
7700000000037830006
3áâà8,3áâà9,3áâà10,3áâà11,3áâà12
7700000000037830007
7700000000037830008
3áâà30,3áâà36,3áâà37,3áâà38,12,12áâà5
7700000000037830009
13áâà9,13áâà43,13áâà44,13áâà46,14,14ª1
7700000000037830010
16,20
7700000000037830011
7700000000037840001
1/8áâà2,3/5áâà1,3/5áâà3,4áâà1,4áâà3
7700000000037850001
7700000000037900001
7700000000037970001
1,2,2áâà2,4
7700000000037980001
3,5,5áâà2,5áâà3,5áâà5,5áâà6,5áâà7
7700000000038000001
7700000000038000002
7700000000038010001
áâà8,áâà9,áâà10,1,1áâà1,1áâà2,7,7áâà2
7700000000038010002
7áâà3,7áâà4,7áâà5,7áâà6,7áâà7,7áâà8
7700000000038010003
7700000000038010004
7áâà14,7áâà15,7áâà17,7áâà18,7áâà23
7700000000038010005
7áâà24,7áâà31,7áâà32,7áâà33,7áâà34
7700000000038010006
7áâà35,7áâà36,7áâà38,7áâà40,7áâà41
7700000000038010007
7700000000038010008
7áâà51,7áâà52,7áâà53,7áâà54,7áâà55
7700000000038010009
7áâà56,7áâà57,7áâà58,7áâà59,7áâà60
7700000000038010010
7áâà61,7áâà62,7áâà1,7áâà2,7áâà3
7700000000038010011
7áâà4,7áâà5,7áâà7,7áâà8,7áâà9,9
7700000000038010012
9áâà1,9áâà2,9áâà3,10,12,15áâà1,15áâà2
7700000000038010013
15áâà3,15áâà4,15áâà6,15áâà12,15áâà13
7700000000038010014
16,16áâà2,16áâà3,17,17áâà1,17áâà2
7700000000038010015
7700000000038010016
17áâà9,17áâà10,17áâà12,18,18áâà2
7700000000038010017
7700000000038010018
18áâà8,18áâà8,18áâà24,20,20áâà2
7700000000038010019
7700000000038010020
7700000000038010021
7700000000038010022
20áâà17,20áâà18,20ª1,20ª1áâà2,20ª1áâà3
7700000000038010023
20ª1áâà4,22ª1,22ª1áâà3,22ª1áâà4,22ª3
7700000000038010024
24áâà1,24áâà2,24áâà3,24áâà5,24áâà7
7700000000038010025
24áâà8,24áâà9,24áâà10,24áâà11,24áâà13
7700000000038010026
24áâà14,24áâà15,24áâà1,24áâà2
7700000000038010027
24áâà3,24áâà5,24áâà6,28áâà1,28áâà6
7700000000038010028
28áâà8,28áâà9,28áâà10,28áâà11,28áâà21
7700000000038010029
28áâà22,28áâà23,28áâà24,28,30,30áâà2
7700000000038010030
30áâà3,30áâà4,30áâà5,30áâà5,30áâà6
7700000000038010031
7700000000038010032
30áâà12,30áâà16,30áâà17,30áâà18
7700000000038010033
30áâà19,30áâà20,30áâà21,30áâà22
7700000000038010034
34áâà2,34áâà3,34áâà5,34áâà6,34áâà7
7700000000038010035
34áâà9,34áâà11,40áâà1,40áâà2,40áâà3
7700000000038010036
40áâà4,40áâà5,44,44áâà2,44áâà3
7700000000038010037
7700000000038010038
44áâà9,44áâà10,50,50áâà2,50áâà3,50áâà4
7700000000038010039
50áâà5,50áâà6
7700000000038010040
6,9,11,13,13áâà2,13ª1,13ª1áâà2
7700000000038080001
13ª1áâà4,13ª2,15áâà2
7700000000038080002
1/3,3,4,5,6,7,8,9,11
7700000000038100001
7700000000038130001
4,4áâà2,4áâà3
7700000000038140001
2,2ª1,5,8ª1,10
7700000000038150001
4,4áâà1,4áâà2,4áâà3,4ª1,4ª2,4ª3,4ª4
7700000000038150002
4ª5,4ª6,6,6áâà1,6áâà2,6áâà3,6áâà4,6ª1
7700000000038150003
6ª2,6ª3,8,8ª1áâà1,8ª1áâà2,8ª2,8ª3
7700000000038150004
1,2,3,4,5,6,7,8,9,10,11,12,13,13áâà2
7700000000038240001
14,15,17,18,19,20,21,22,23,26,28
7700000000038240002
1,2,3,4_6áâà1,4_6áâà2,7,8,9,10,11,12
7700000000038250001
13,14,15,16,17,18,19
7700000000038250002
1,2,3,5,6,7,8,9,10,11,12,14,16,18áâà1
7700000000038260001
18áâà2,20
7700000000038260002
7700000000038270001
3,4áâà2
7700000000038280001
5áâà1,5áâà2,5áâà3
7700000000038290001
7700000000038310001
6áâà8,6áâà9,7,9,11áâà1,11áâà2,11áâà3
7700000000038310002
7700000000038310003
13ª2,13ª2áâà2,13ª2áâà7
7700000000038310004
6áâà1,8
7700000000038320001
2,2áâà2,3áâà1
7700000000038330001
7700000000038350001
1áâà1,1áâà2,1áâà3,1áâà4,58,58áâà2
7700000000038360001
58áâà3,58áâà4,62,62áâà2,62áâà4,62áâà5
7700000000038360002
62áâà6,64áâà1,64áâà2,64áâà3,64áâà4
7700000000038360003
64áâà5,64áâà6,64áâà7,64áâà8,64áâà9
7700000000038360004
64áâà10,64áâà11,64áâà12,64áâà13
7700000000038360005
64áâà1,64áâà2,65
7700000000038360006
7áâà1,7áâà2,7áâà3,7áâà5,7áâà6,7áâà6
7700000000038390001
7áâà7,7áâà8,7áâà8,7áâà9,7áâà14,7áâà16
7700000000038390002
7áâà19,7áâà37,7áâà47,7áâà48,7áâà49,7ª2
7700000000038390003
7ª3,7ª7,7ª9,7ª11,7ª13,7ª15
7700000000038390004
7700000000038400001
1áâà1,4,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000038410001
7700000000038420001
7700000000038420002
7700000000038420003
1áâà19,1áâà20,1áâà21,1áâà22,1áâà24
7700000000038420004
1áâà25,1áâà26,1áâà27,1áâà28,1áâà30
7700000000038420005
1áâà31,1áâà32,1áâà34,1áâà35,1áâà36
7700000000038420006
1áâà37,1áâà38,1áâà39,1áâà40,1áâà41
7700000000038420007
7700000000038420008
1áâà47,1áâà48,1áâà49,1áâà50,1áâà51
7700000000038420009
7700000000038420010
7700000000038420011
1áâà67,1áâà68,1áâà69,1áâà71,1áâà72
7700000000038420012
1áâà73,1áâà74,1áâà76,1áâà77,1áâà78
7700000000038420013
1áâà79,1áâà80,1áâà84,1áâà86,1áâà91
7700000000038420014
1áâà94,1áâà96,1áâà98,1áâà100,1áâà101
7700000000038420015
1áâà102,1áâà103,1áâà105,1áâà106
7700000000038420016
1áâà107,1áâà107,1áâà108,1áâà110
7700000000038420017
1áâà111,1áâà113,1áâà114,1áâà115,4
7700000000038420018
4áâà1,4áâà2,4áâà3,4áâà4,6,6áâà1,6
7700000000038420019
12áâà
7700000000038420020
6,6áâà1,6áâà2,8,8áâà3,8áâà4,8áâà5,8áâà6
7700000000038430001
7700000000038430002
1áâà8,1áâà9,1áâà13,1áâà14,1áâà15
7700000000038430003
7700000000038430004
1áâà23,1áâà24,1áâà25,1áâà26,1áâà29
7700000000038430005
1áâà31,1áâà58,1áâà59,1áâà60,1áâà61
7700000000038430006
7700000000038430007
7700000000038430008
7700000000038430009
1áâà13,1áâà14,1áâà15,1áâà16
7700000000038430010
1áâà17,1áâà18,1áâà19,1,4áâà1,4áâà2
7700000000038430011
4áâà3,4áâà4,4áâà5,4áâà6,4áâà9,4áâà10
7700000000038430012
4áâà11,7áâà1,7áâà2,7áâà3,7áâà4,7áâà7
7700000000038430013
7áâà8,7áâà11
7700000000038430014
5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000038450001
2,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6,2ª1
7700000000038490001
2ª1áâà2,2ª1áâà3,2ª1áâà5,2ª1áâà6
7700000000038490002
2ª1áâà7,3,3áâà2,3áâà3,3áâà6,4áâà1,5
7700000000038490003
5áâà2,5áâà3,11,11áâà1,11áâà2,11áâà4
7700000000038490004
7700000000038490005
11áâà15,12áâà1,12áâà2
7700000000038490006
7700000000038500001
2áâà1,3,4,5
7700000000038540001
7700000000038560001
1áâà1,3,3áâà2,3áâà3,3áâà4,3áâà6,3áâà7
7700000000038570001
3áâà7,3áâà8,3áâà9,3áâà10,3áâà11
7700000000038570002
3áâà12,3,5áâà1,5áâà2,5áâà3,5áâà4
7700000000038570003
5áâà5,5áâà6,5áâà8
7700000000038570004
7700000000038640001
7700000000038640002
7700000000038640003
7700000000038640004
3áâà15,3áâà16,4,4áâà1,4ª1,4ª2,5,10
7700000000038640005
16ª3,18,18áâà1,20,20áâà1,20áâà2
7700000000038640006
7700000000038650001
áâà6,1áâà38,1áâà118,1ª1,1ª2,1ª3,1ª4
7700000000038760001
1ª5,1ª6,1ª7,1ª8,1ª9,1ª10,1ª11,1ª12
7700000000038760002
1ª13,1ª14,1ª15,1ª16,1ª17,1ª18,1ª19
7700000000038760003
1ª20,1ª21,1ª22,1ª23,1ª24,1ª25,1ª26
7700000000038760004
1ª27,1ª28,1ª29,1ª30,1ª31,1ª32,1ª33
7700000000038760005
1ª34,1ª35,1ª36,1ª37,1ª38,1ª39,1ª40
7700000000038760006
1ª41,1ª42,1ª43,1ª44,1ª45,1ª46,1ª47
7700000000038760007
1ª48,1ª49,1ª50,1ª50áâà1,1ª51,1ª52,1ª53
7700000000038760008
1ª54,1ª55,1ª56,1ª57,1ª58,1ª59,1ª60
7700000000038760009
1ª61,1ª62,1ª63,1ª64,1ª65,1ª66,1ª67
7700000000038760010
1ª68,1ª69,1ª70,1ª71,1ª72,1ª73,1ª74
7700000000038760011
1ª75,1ª76,1ª77,1ª78,1ª79,1ª80,1ª81
7700000000038760012
1ª82,1ª83,1ª84,1ª85,1ª86,1ª87,1ª88
7700000000038760013
1ª89,1ª90,1ª91,1ª92,1ª93,1ª94,1ª95
7700000000038760014
1ª96,1ª97,1ª98,1ª99,1ª100,1ª101,1ª102
7700000000038760015
1ª103,1ª104,1ª105,1ª106,1ª108,1ª110
7700000000038760016
1ª112,1ª114,1ª116,1ª118,1,1ª1,1ª2
7700000000038760017
1ª3,1ª4,1ª5,1ª6,1ª7,1ª8,1ª9
7700000000038760018
1ª10,1ª11,1ª12,1ª13,1ª14,1ª15,1
7700000000038760019
1ª1,1ª2,1ª3,1ª1,1ª2,1ª3,1ª4
7700000000038760020
1ª5,1ª6,1ª7,1ª8,1ª9,1ª10,1ª11
7700000000038760021
1ª12,1ª13,1ª14,1ª15,1ª16,1ª17,1
7700000000038760022
1,1,1,2,2ª1,2ª1áâà1,2ª1áâà2,2ª1áâà3
7700000000038760023
7700000000038760024
4áâà7,4áâà8,4áâà9,4áâà11,4áâà12,4áâà13
7700000000038760025
7700000000038760026
4áâà19,4áâà21,6,8,10ª1,10ª1áâà1
7700000000038760027
10ª1áâà2,10ª2,10ª3,10ª3áâà1,12ª1,12ª2
7700000000038760028
12ª2áâà1,12ª3,12ª3áâà1,12ª4,12ª5,12ª6
7700000000038760029
12ª6áâà1,14ª1,14ª1áâà1,14ª1áâà2,14ª2
7700000000038760030
14ª2áâà1,14ª3,14ª3áâà1,14ª4,14ª5
7700000000038760031
14ª5áâà1
7700000000038760032
7700000000038780001
7700000000038800001
17áâà1,17áâà2,17áâà3,17áâà6
7700000000038810001
17áâà7,17áâà10,17áâà11,17áâà1
7700000000038810002
17áâà2,17áâà3,17áâà4,17áâà5,19áâà1
7700000000038810003
19áâà2,19áâà3,19áâà5,19áâà6,19áâà7
7700000000038810004
19áâà8,19áâà9,19áâà10,19áâà11,19áâà14
7700000000038810005
19áâà20,19áâà21,19
7700000000038810006
7700000000038830001
2,2áâà2,3,4,7
7700000000038870001
1áâà1,1áâà4,1áâà5,1áâà6,1áâà7,1áâà8
7700000000038900001
1ª1,1ª1áâà1,1ª2,1ª3,1,1áâà1,2áâà1
7700000000038900002
2áâà2,2áâà4,2áâà5,4áâà1,4áâà2,4áâà3
7700000000038900003
4áâà4,4áâà5,4áâà6,4áâà8,4áâà9,4áâà10
7700000000038900004
4áâà11,4áâà12,5ª2,7,7áâà1,7áâà2,7ª1
7700000000038900005
9ª1,9ª1áâà2,9ª2,10,11,11áâà2,12,12áâà1
7700000000038900006
13áâà1,13áâà2,14,14áâà1,14áâà2,14áâà3
7700000000038900007
7700000000038900008
7700000000038900009
7700000000038900010
7700000000038900011
7700000000038900012
14áâà26,14áâà27,14áâà28,15ª1,15ª1áâà2
7700000000038900013
15ª2,17,17áâà1,18áâà1,18áâà2,18áâà3
7700000000038900014
7700000000038900015
18áâà9,18áâà10,18áâà11,18áâà12,18áâà13
7700000000038900016
18áâà14,18áâà16,18áâà17,18áâà19
7700000000038900017
18áâà21,18áâà22,18,18áâà1,18áâà2
7700000000038900018
18,19ª2,21,21áâà1,21áâà2,23ª1,23ª2,25
7700000000038900019
25áâà1,25ª3,26áâà1,26áâà2,27ª1,27ª2
7700000000038900020
27ª2áâà1,27ª3,27,29,31,33,35,37
7700000000038900021
37áâà1,39
7700000000038900022
áâà2,12,12,14,15
7700000000038930001
4,4áâà2,4áâà3,4áâà4,4áâà5
7700000000039240001
áâà24,1,1áâà2,1,3,4,5,6,7,8,9,10
7700000000039300001
10áâà2,11,12,13,14,16,22,24,25,26,26
7700000000039300002
28,28áâà1,28áâà2,29,30,32,33,34,35
7700000000039300003
36,37
7700000000039300004
1,3,3áâà1,3áâà2,4,4áâà1,4áâà2,4áâà3
7700000000039340001
4áâà4,5áâà1,5áâà1,5áâà2,5áâà3
7700000000039340002
5áâà1,5áâà2,5áâà3,5áâà4,5áâà5
7700000000039340003
5áâà1,5áâà1,6,6áâà1,7áâà1,7áâà1
7700000000039340004
7áâà2,7áâà3,10áâà1,10áâà2,16,17
7700000000039340005
17ª1,18ª1,18ª1áâà1,19,20,20áâà1,20áâà2
7700000000039340006
11ª1,11ª2,11ª3,16,16áâà2,16áâà3,16ª3
7700000000039350001
38,39áâà1,40ª1,40ª1áâà1,41,41áâà1,41ª1
7700000000039350002
41ª2,42,42áâà1,43,44áâà1,44áâà2,45áâà1
7700000000039350003
46áâà1,46áâà2,47,47áâà1,47áâà2
7700000000039350004
7700000000039350005
7700000000039350006
47áâà13,47áâà14,47áâà15,47áâà16
7700000000039350007
47áâà17,51áâà1,51áâà2,51áâà3,52áâà1
7700000000039350008
52áâà2,52áâà3,52áâà4,52áâà5,54áâà1
7700000000039350009
5,5áâà1,6,7,7áâà1,9,10,11,11áâà1
7700000000039360001
11áâà2,11áâà3,11áâà4,11áâà5,11áâà1,14
7700000000039360002
14áâà2,14áâà3,71,71ª1,72áâà1,72ª1
7700000000039360003
72ª1áâà1,74áâà7,77áâà1,77áâà5,78áâà4
7700000000039360004
79áâà1,80áâà1,80_81áâà4,81áâà2,82,83
7700000000039360005
14ª2áâà4,14ª2áâà5,14ª2áâà6,14ª3
7700000000039370001
14ª2,14ª2áâà1,14ª2áâà2,14ª2áâà3
7700000000039370002
14ª3áâà1,14ª3áâà2,14ª3áâà3,14ª3áâà4
7700000000039370003
16áâà2,17,17áâà1,17áâà2,17áâà3,17áâà4
7700000000039370004
14ª3áâà5,14ª3áâà6,15,15áâà1,16,16áâà1
7700000000039370005
17áâà6,17áâà7,18ª2,18ª3,18ª4,18ª4áâà1
7700000000039370006
18ª4áâà2,18ª4áâà3,18,19ª1áâà5
7700000000039370007
19ª1áâà6,19ª5,19áâà1,19áâà3,19áâà4
7700000000039370008
19,19áâà1,19áâà3,72,72áâà13,72ª1
7700000000039370009
72ª2,72ª3,72ª4,72ª5,72ª6,72ª6áâà1,72ª7
7700000000039370010
72ª8,72ª9,72ª10,72ª11,73,73áâà1,74
7700000000039370011
153áâà2,153áâà3,153áâà4,153áâà5
7700000000039370012
153áâà6,153áâà7,153áâà8,153áâà18
7700000000039370013
153áâà34,155,155áâà2,155áâà3,155áâà6
7700000000039370014
74áâà1,74áâà2,74áâà1,76,76áâà1,76áâà2
7700000000039370015
76áâà3,76áâà4,126,126ª1,126ª2,126ª3
7700000000039370016
3áâà1,3áâà2,3áâà6,5áâà1,6
7700000000039410001
1/2,3,25áâà9,25/12ª6
7700000000039420001
7700000000039430001
7700000000039550001
2áâà1,2áâà2,3áâà1,3áâà2,3áâà4
7700000000039570001
3áâà5,3áâà1,3áâà2,3áâà3,3,4,4áâà1
7700000000039570002
6,12áâà1,14áâà1
7700000000039570003
7,7áâà1,9,9áâà1,11,13,15,17,19,21,23
7700000000039570004
27,29,31,31,33,35,39,41,42,42áâà1
7700000000039570005
42áâà2,43,45,47,48áâà1,48áâà2,48áâà3
7700000000039570006
48áâà4,48áâà5,48áâà6,48áâà7,48áâà8
7700000000039570007
48áâà9,48áâà10,49,51,53,53,55ª1,55ª2
7700000000039570008
55ª3,55ª4,57,59áâà1,75áâà1,75áâà2
7700000000039570009
75áâà3,75áâà4,75áâà5,75áâà6,75áâà7
7700000000039570010
75áâà8,75áâà9,75áâà10,75áâà11,75áâà13
7700000000039570011
75áâà13,75áâà14,75áâà15,75áâà17
7700000000039570012
2,4,6,6,8,8áâà1,10,12,14
7700000000039580001
1,1ª1,1ª2,1ª3,1ª4,1ª5,1ª6,1ª7,1ª8,1,3
7700000000039580002
3áâà1,3áâà2,3ª1,3ª1áâà1,5,5ª1,16,18,19
7700000000039580003
19ª1,19ª2,19ª2áâà1,20,21,21áâà1,21áâà2
7700000000039580004
22,23,23ª1,23ª2,23ª3,23ª4,23ª5,23ª6,24
7700000000039580005
25,25ª1,25ª2,25ª3,25ª4,25ª5,25ª6,26
7700000000039580006
26áâà1,28,30,32,32,34,36,38,40,42,46
7700000000039580007
1,2,2áâà1,2áâà2,3,3áâà1,5,7,8,9,10
7700000000039590001
10áâà1,10áâà2,11,12,13,15,17,19,19áâà1
7700000000039590002
19áâà2,19áâà3,19áâà4,19áâà5,21,21áâà
7700000000039590003
23,25,25áâà,25ª1,25ª2,25ª3,25,29
7700000000039590004
29áâà,29ª1,29ª2,33,35,35áâà1,36
7700000000039590005
36áâà1,38,38áâà1,38ª1,41,42,42áâà1
7700000000039590006
42ª1,44,44ª1,45,47,49,50,50áâà,50áâà2
7700000000039590007
50ª1,50ª2,50ª4,51,52,52áâà,52ª1,52ª2
7700000000039590008
52,53,55,56,56áâà,56ª1,56ª2,56ª3,57
7700000000039590009
58,59,60,61,62,62áâà,62,65,66,66áâà
7700000000039590010
68,68,69,69áâà,71,72,72áâà,72ª1
7700000000039590011
72ª2,72ª3,72ª4,73,75,76,76ª1,76,77
7700000000039590012
77áâà1,78áâà1,80,80áâà,80ª1,81,84
7700000000039590013
84áâà,84ª1,84ª2,84ª3,85,85áâà,85áâà1
7700000000039590014
86,86áâà,86ª1,86ª2,86,87,88,89,91
7700000000039590015
93,95,96,97,99,99,101,103,105,107
7700000000039590016
109,111,113,117,121,121,123,125,125
7700000000039590017
129,133,135,137,139,143,145,147
7700000000039590018
áâà6,2,2,4,8,10,12,14,14áâà1,16,18
7700000000039610001
18,18,20
7700000000039610002
1áâà1,3,3,5,7,9,11
7700000000039610003
6áâà1,6ª1,8,8ª,8áâà1,8ª1,8ª1áâà1,8ª2
7700000000039660001
10,10áâà1,10ª1,10ª2
7700000000039660002
1,1,1,5,7,9,15áâà12,15áâà13,15áâà14
7700000000039680001
23,37,42áâà1,42áâà2
7700000000039680002
áâà3,áâà4,áâà5,áâà7,áâà7,áâà8,áâà9
7700000000039810001
áâà10,áâà12,áâà13,áâà14,áâà15,áâà16
7700000000039810002
áâà26,1,1áâà1,1áâà2,1áâà3,1áâà7,1áâà7
7700000000039810003
1áâà15,1áâà20,1áâà23,1áâà24,1áâà25
7700000000039810004
1áâà37,2,2áâà3,2áâà3,2áâà4,2áâà5
7700000000039810005
1,2,3,4,5,7,10,10áâà1,10,32áâà1
7700000000039820001
7700000000039820002
7700000000039820003
32áâà13,32áâà14,32áâà15,32áâà16
7700000000039820004
9,9,11,13,15,17áâà1,19,19,21,23
7700000000039820005
23áâà1,25,27,27áâà1,29
7700000000039820006
1,2,2,3,4,5,6,7,8,10,11,13,14,15,16
7700000000039830001
7700000000039830002
1áâà1,1áâà2,1áâà3,1áâà4,2,2áâà1,3áâà6
7700000000039890001
3áâà14,3áâà17,4áâà1,4áâà2,4áâà3,4áâà4
7700000000039890002
4áâà5,4áâà6,4áâà7,4áâà8,5áâà1,5áâà2
7700000000039890003
5áâà3,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000039890004
6áâà6,7áâà1,7áâà2,7áâà3,7áâà4,7áâà5
7700000000039890005
7áâà6,7áâà7,7áâà8,8áâà1,8áâà2,8áâà3
7700000000039890006
8áâà4,8áâà5,8áâà6,8áâà11,8áâà16,9áâà1
7700000000039890007
7700000000039890008
10áâà1,10áâà2,11áâà1,11áâà2,11áâà3
7700000000039890009
11áâà4,11áâà5,13áâà1,13áâà3,14áâà1
7700000000039890010
16áâà1,16áâà2,16áâà3,16áâà4,18,18áâà1
7700000000039890011
18áâà4,18áâà7,18áâà8,18áâà9,18áâà10
7700000000039890012
1áâà1,1áâà5,1áâà16
7700000000039900001
4áâà3,4áâà4,4áâà5
7700000000039930001
7700000000040960001
7700000000040970001
7700000000041030001
2,2áâà2,2ª1
7700000000041040001
áâà1,áâà2,áâà3,áâà16,ª1,ª2,ª3,1,2,3
7700000000041070001
3áâà1,4,5,6áâà1,13,14,15,15áâà2,16,17
7700000000041070002
18áâà1,19áâà1,19áâà2,19áâà3,36áâà1,37
7700000000041070003
37áâà2,37áâà3,37áâà4,37,37áâà1
7700000000041070004
37áâà3,37áâà4,37áâà7,37áâà10
7700000000041070005
37áâà13,37áâà17,37áâà19,37áâà20
7700000000041070006
37áâà1,37áâà2,37áâà3,37áâà4
7700000000041070007
37áâà5,37áâà6,37áâà7,39,39áâà1
7700000000041070008
39áâà2,39áâà3,39áâà4,39áâà5,39áâà6
7700000000041070009
39áâà7,39áâà8,39áâà9,39áâà10,39áâà11
7700000000041070010
39áâà12,41ª1,45,45áâà1,45áâà2,45áâà3
7700000000041070011
45áâà4,47,47áâà1,47áâà2,50áâà1,62,62ª2
7700000000041070012
62,68,83áâà1,104áâà1,106áâà1,110
7700000000041070013
110áâà1,110áâà2,110áâà3,116áâà1
7700000000041070014
117áâà1,135áâà1,138áâà1,160
7700000000041070015
2áâà1,2áâà2,2áâà3,2ª1,2ª2,2,4áâà1
7700000000041190001
2,3áâà1,3áâà2,3áâà3,3áâà4,3ª1,3ª2,4,6
7700000000041210001
8,10,12,12áâà1,12áâà2,12áâà3,13áâà1
7700000000041210002
ª1áâà1,ª5áâà1
7700000000041270001
1,1ª2,3,5ª1,5ª1áâà2,5ª2,7,7ª2
7700000000041280001
2ª1,2áâà1,4ª1,4ª2,4ª3,4áâà1,6ª1
7700000000041280002
6ª1áâà1,8ª1,11ª1,11ª2,13ª2,14,15ª1
7700000000041280003
15ª1áâà1,15ª2,16,18ª2,19,19áâà1,19áâà2
7700000000041280004
19áâà3,20,22ª2,24,26,26áâà1
7700000000041280005
11ª1,11ª2,12,13áâà1,13ª1,13ª2,13ª3
7700000000041290001
14ª1,14ª2,15ª1,15ª2,16ª1,16ª2,17,18ª1
7700000000041290002
18ª2,18ª3,19áâà2,19áâà3,19áâà4,19áâà5
7700000000041290003
19ª1,20,23,25ª1,25ª2,26ª1,26ª2,26ª3
7700000000041290004
27ª1,27ª2,27ª3,28ª1,28ª2,32ª2
7700000000041290005
1,1áâà1,2,3áâà1,3ª1,3ª2,4ª1,4ª2,4ª3,5
7700000000041300001
5ª2,6
7700000000041300002
21,23,23,27ª1,27ª2,29,31ª1,31
7700000000041320001
3ª1,3ª2,3ª3,5/14,6,9,10,13ª1,13ª2,15
7700000000041320002
17/22,17/22áâà2
7700000000041320003
7700000000041330001
1áâà6,1áâà7,1áâà10
7700000000041330002
1,2,2áâà1,2áâà2,3,4,5,6,7,8,9,10,10ª1
7700000000041350001
10ª1,11,13
7700000000041350002
7700000000041360001
12áâà6,12áâà7,12áâà8,12áâà9
7700000000041360002
7700000000041380001
7700000000041380002
1áâà11,1áâà12,1áâà13,1áâà14
7700000000041380003
1áâà15,1áâà16,1áâà18,1áâà19
7700000000041380004
1áâà20,1áâà21,1áâà22,1áâà23
7700000000041380005
1áâà25,1áâà27,1áâà29,1áâà31
7700000000041380006
1áâà32,1áâà33,1áâà34,1áâà35
7700000000041380007
1áâà36,1áâà37,1áâà38,1áâà39
7700000000041380008
1áâà40,1áâà41,1áâà42,1áâà43
7700000000041380009
1áâà44,1áâà45,1áâà46,1áâà48
7700000000041380010
1áâà49,1áâà50,1áâà51,1áâà52
7700000000041380011
1áâà53,1áâà54,1áâà55,1áâà56
7700000000041380012
1áâà57,1áâà58,1áâà59,1áâà60
7700000000041380013
1áâà61,1áâà62,1áâà63,1áâà64
7700000000041380014
1áâà67,1áâà69,1áâà70,1áâà71
7700000000041380015
1áâà72,1áâà73,1áâà74,1áâà75
7700000000041380016
1áâà76,1áâà77,1áâà78,1áâà80,2áâà2
7700000000041380017
2áâà3,2áâà4,2áâà5,2áâà6,2áâà11,2áâà15
7700000000041380018
2áâà16,2áâà17,19áâà3,19áâà4,19áâà7
7700000000041380019
7700000000041380020
19áâà13,19áâà14,19áâà15,19áâà1,19áâà2
7700000000041380021
6,6áâà2,6ª1,6ª2,8,8ª1,8ª2,8ª3,8ª4,10
7700000000041410001
10ª1,10ª2,10ª3,10ª3
7700000000041410002
1,1ª1,1,1,3,3ª1,3ª2,3,5ª1,5ª2,5ª3
7700000000041410003
7ª1,7ª2,7ª3,9,9áâà1,9áâà2,11
7700000000041410004
14ª2,14ª3,16ª1,16ª2,17áâà1,18ª1,18ª2
7700000000041410005
18ª3,19,20ª2,20ª3,21,23,25,27,31/19
7700000000041410006
1/8,2,3,4ª1,4ª2,4ª2áâà2,4ª3,5,5ª1,5ª2
7700000000041420001
6,7,8ª1,8ª1áâà2,9ª1,9ª2,10ª1,10ª2,11
7700000000041420002
12ª1,12ª1áâà2,12ª2,13
7700000000041420003
14,15,15áâà2,15áâà3,15áâà4,15áâà9
7700000000041480001
7700000000041480002
17áâà6,17áâà7,19áâà1,19áâà2,19áâà3
7700000000041480003
19áâà7,21áâà1,21áâà2,23áâà1,23áâà2
7700000000041480004
7/2,9,9ª1,11,12,12áâà1,12áâà2,12ª1,13
7700000000041500001
14,14ª1,14ª2,14ª4,15,16,16ª1,16ª2,17
7700000000041500002
18,18áâà1,19,19ª1,20,20áâà1,20áâà2
7700000000041500003
20ª1,21,22,22áâà2,23,27,28,29,29áâà1
7700000000041500004
30,30áâà1,32,33,34,35/2,37,37áâà1,40
7700000000041500005
40áâà1,40áâà3,40ª2,42ª1,44ª1,44ª1áâà1
7700000000041500006
44ª1áâà2,44ª1áâà3,44ª1áâà4,46,46áâà1
7700000000041500007
7700000000041500008
7700000000041500009
7700000000041500010
1áâà1,1áâà2,1áâà3,2áâà1,2áâà1,6
7700000000041510001
6áâà1,7áâà1,7áâà2,7áâà3,7áâà4,10
7700000000041510002
7700000000041510003
7700000000041510004
7700000000041610001
1_áâà1,1_áâà2,1_áâà3,1_áâà4
7700000000041720001
1_áâà5,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000041720002
7700000000041720003
7700000000041720004
2áâà17,2,3,4,5,6,7,7áâà1,8,9,10,12
7700000000041720005
13_áâà1,13_áâà2,14,28,30,30,32,34
7700000000041720006
36,38áâà1,38áâà2,38áâà3,40,40áâà1,40áâà2
7700000000041720007
2,4,6,8,10,12,12áâà1,12áâà2,12áâà3
7700000000041730001
12áâà4,12áâà5,12áâà6,12áâà7,12áâà9
7700000000041730002
12áâà10,12áâà11,12áâà12,12áâà13,12,13
7700000000041730003
14áâà1,14áâà2,15,16,18,20,22,24,26
7700000000041730004
26áâà1,40áâà1,40áâà2,42,42áâà1,42áâà2
7700000000041730005
42áâà3,42áâà4,42áâà5,42áâà6,42
7700000000041730006
42áâà1,42áâà2,42áâà3,42áâà4
7700000000041730007
42áâà5,42áâà6,42áâà7,42áâà8
7700000000041730008
1,1áâà2,3,5áâà1,5ª1,5ª2,5ª3,5ª4,5ª5
7700000000041810001
5ª6,5ª7,5ª8,5ª9,5ª10,5ª11,5ª12,5ª13
7700000000041810002
5ª14,7ª1,7ª2,7ª3,7ª4,7ª5,7ª6,7ª7,7ª8
7700000000041810003
7ª9,7ª10,7ª11,7ª12,9,10,11,12,12ª1
7700000000041810004
14ª1,14ª2,14ª3,14ª4,14ª5,14ª6,14ª7
7700000000041810005
14ª8,14ª9,14ª10,14ª11,14ª12,14ª13
7700000000041810006
14ª14,15,15áâà1,16ª1,16ª2,16ª3,16ª4
7700000000041810007
16ª5,16ª6,16ª7,16ª8,16ª9,16ª10,16ª11
7700000000041810008
16ª12,16ª13,16ª14,17,18ª1,18ª2,18ª3
7700000000041810009
20áâà1,20ª1,20ª2,20ª3,22ª1,22ª2,22ª3
7700000000041810010
22ª4,22ª5,22ª6,22ª7,22ª8,22ª9,22ª10
7700000000041810011
22ª11,22ª12,22ª13,22ª14,22ª15,24,24ª1
7700000000041810012
24ª2,26ª1,26ª2,26ª3,26ª4,26ª5,26ª6
7700000000041810013
26ª7,26ª8,26ª9,26ª10,26ª11,28ª1,28ª2
7700000000041810014
2,2áâà2,2áâà3,4
7700000000041830001
1,2,2ª1,4ª1,4ª2,6ª1,6ª2,8,10,12,14
7700000000041900001
16ª1,20,22,24ª1,24ª2,24ª3,24ª4
7700000000041900002
1áâà1,1áâà2,1áâà3,2,2áâà1,2áâà2
7700000000041910001
2áâà3,2áâà4,2áâà5,2áâà6,4áâà1
7700000000041910002
4áâà2,4áâà3,4,6,6,7áâà1,7áâà2,7áâà3
7700000000041910003
7áâà4,7áâà5,7áâà6,12,13áâà1,13áâà2
7700000000041910004
7700000000041950001
7700000000041950002
7700000000041950003
7700000000041950004
7700000000042010001
7700000000042020001
2,2áâà2,2áâà3,2áâà4,2
7700000000042030001
7700000000042040001
7700000000042060001
5,7,9,11
7700000000042130001
2áâà1,2áâà2,2ª1,3áâà1,4,6áâà1,8áâà1
7700000000042150001
4/6áâà2,4/6áâà3,4/6áâà4
7700000000042180001
7700000000042260001
7700000000042260002
2áâà13,2áâà14,2áâà15,2áâà15,2áâà16
7700000000042260003
2áâà17,2áâà18,2áâà19,2áâà19,2áâà20
7700000000042260004
7700000000042260005
2áâà26,2áâà27,2áâà30,2áâà33,2áâà34
7700000000042260006
2áâà35,2áâà36,2áâà38,2áâà40,2áâà41
7700000000042260007
2áâà42,2áâà43,2áâà44,2áâà45,2áâà46
7700000000042260008
2áâà47,2áâà48,2áâà49,2áâà50,2áâà51
7700000000042260009
7700000000042260010
2áâà57,2áâà58,2áâà59,2áâà60,2áâà93
7700000000042260011
7700000000042280001
124482
7735
45272585001
24,24áâà1,73,73áâà1,73ª1,73ª2,73ª3
7700000000042290001
73ª4,73ª5,73ª6,74,74áâà7,74ª1,74ª2
7700000000042290002
74ª3,74ª4,74ª5
7700000000042290003
1,4,14áâà1
7700000000042360001
ª1,ª14,ª24
7700000000042420001
áâà3,24áâà1,24áâà2,24áâà3,24áâà3
7700000000042430001
24áâà4,24áâà5,24áâà7,24áâà8,24áâà9
7700000000042430002
24áâà10,24áâà11,24áâà12,24áâà13
7700000000042430003
24áâà14,24áâà15,24áâà16,24áâà17
7700000000042430004
24áâà18,24áâà19,24áâà20,24áâà21
7700000000042430005
24áâà22,24áâà23,24áâà25,24áâà26
7700000000042430006
24áâà27,24áâà28,24áâà29,24áâà30
7700000000042430007
24áâà31,24áâà32,24áâà33,24áâà35
7700000000042430008
7700000000042440001
áâà8,áâà9,áâà11,áâà13,áâà14,áâà15
7700000000042440002
áâà17,áâà18,áâà20,áâà21,áâà22,áâà23
7700000000042440003
áâà24,áâà25,áâà26,áâà27,áâà28,áâà29
7700000000042440004
áâà30,áâà31,áâà33,áâà34,áâà35,áâà35
7700000000042440005
áâà36,áâà37,áâà38,áâà38,áâà39,áâà41
7700000000042440006
áâà42,áâà43,áâà44,áâà45,áâà46,áâà47
7700000000042440007
áâà48,áâà49,áâà51,áâà52,áâà53,áâà56
7700000000042440008
áâà58,áâà59,áâà60,áâà61,áâà62,áâà63
7700000000042440009
áâà64,áâà65,áâà66,áâà67,áâà68,áâà69
7700000000042440010
áâà70,áâà71,áâà71,áâà72,áâà73,áâà74
7700000000042440011
áâà75,áâà79,áâà80,áâà82,áâà84,áâà84
7700000000042440012
áâà88,áâà89,áâà90,áâà91,áâà95,áâà97
7700000000042440013
áâà98,áâà101,áâà102,áâà104,áâà105
7700000000042440014
áâà126,áâà129,áâà130,áâà131,áâà133
7700000000042440015
áâà134,áâà136,áâà137,áâà139,áâà140
7700000000042440016
áâà141,áâà142,áâà149,áâà153,áâà154
7700000000042440017
áâà163,áâà164,áâà165,áâà166,áâà167
7700000000042440018
áâà169,áâà170,áâà171,áâà172,áâà174
7700000000042440019
áâà174,áâà178,áâà179,áâà180,áâà181
7700000000042440020
áâà186,áâà188,áâà189,áâà191,áâà194
7700000000042440021
áâà195,áâà200,áâà219,áâà220,áâà227
7700000000042440022
áâà228,áâà231,áâà233,áâà244,áâà245
7700000000042440023
áâà246,áâà259,áâà270,áâà275,áâà288
7700000000042440024
áâà289,áâà290,áâà295,áâà298,áâà310
7700000000042440025
áâà312,áâà319,áâà322,áâà323,áâà325
7700000000042440026
áâà326,áâà327,áâà327,áâà328,áâà329
7700000000042440027
áâà330,áâà331,áâà333,áâà334,áâà335
7700000000042440028
áâà336,áâà337,áâà339,áâà341,áâà342
7700000000042440029
áâà343,áâà344,áâà345,áâà346,áâà347
7700000000042440030
áâà349,áâà350,áâà351,áâà352,áâà353
7700000000042440031
áâà354,áâà355,áâà356,áâà357,áâà417
7700000000042440032
áâà418,áâà419,áâà420,áâà442,áâà455
7700000000042440033
áâà467,áâà469,áâà475,áâà478,áâà481
7700000000042440034
áâà482,áâà483,áâà486,áâà493,áâà494
7700000000042440035
áâà495,áâà500,áâà507,áâà508,áâà510
7700000000042440036
áâà511,áâà511,áâà518,áâà519,áâà521
7700000000042440037
áâà524,áâà528,áâà529,áâà530,áâà532
7700000000042440038
áâà535,áâà536,áâà544,áâà545,áâà548
7700000000042440039
áâà549,áâà550,áâà551,áâà557,áâà558
7700000000042440040
áâà559,áâà562,áâà565,áâà566,áâà567
7700000000042440041
áâà569,áâà571,áâà571,áâà575,áâà577
7700000000042440042
áâà578,áâà579,áâà580,áâà581,áâà582
7700000000042440043
áâà583,áâà584,áâà585,áâà586,áâà587
7700000000042440044
áâà588,áâà589,áâà590,áâà591,áâà592
7700000000042440045
áâà593,áâà596,áâà597,áâà598,áâà599
7700000000042440046
áâà600,áâà601,áâà602,áâà603,áâà604
7700000000042440047
áâà612,áâà615,áâà621,ª1,ª47
7700000000042440048
1/2áâà1,1/2áâà2,1/2áâà3,3áâà1,3áâà2
7700000000042450001
3áâà3,3áâà4,8/5,10,11áâà7,11áâà13
7700000000042450002
11áâà15,11áâà16,11áâà19,11áâà30
7700000000042450003
11áâà33,11áâà44,11áâà46,11áâà49
7700000000042450004
11áâà50,11áâà51,11áâà56,11áâà60
7700000000042450005
11áâà60,11áâà61,11áâà68,11ª2,11ª4,12
7700000000042450006
15/1,15/1ª1,16,16áâà1,16áâà2,16áâà3
7700000000042450009
16áâà4,16áâà7,18,20,20áâà3,20áâà5,20
7700000000042450010
22,22áâà3,22áâà4,24,26,28,30,30áâà1,32
7700000000042450011
34,34áâà2
7700000000042450012
1,2,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000042470001
3áâà6,4,5,5ª26áâà1,5ª26áâà2,5ª26áâà3,6
7700000000042470002
8,9,10,12,14ª2,16,22,22áâà,22ª1,22
7700000000042470003
23,24,24ª1,24ª2,25,26,26áâà,30,34,36
7700000000042470004
38,40,42,43,44,45áâà1,45áâà3,45áâà4
7700000000042470005
46,48,50,52,52ª1,54,56,56ª1,56ª1áâà1
7700000000042470006
56ª2,56ª2áâà1,62,64,66,68,70,72,74,80
7700000000042470007
82,84,86,88,90,92,94,100,102,102,104
7700000000042470008
106,110,110,112,116,118,120
7700000000042470009
3,3áâà1,5,7,11,11áâà1,11ª1,13,13ª1
7700000000042720001
13ª1áâà1,15,15áâà1,15ª1,15,19,21
7700000000042720002
21áâà1,21ª1,21ª2,21ª2áâà1,21ª3,22áâà5
7700000000042720003
28ª1,28ª2,28ª3,28ª4,28ª5,28ª6,28ª7
7700000000042720004
28ª8,85,91ª2,91ª3,91ª4,93áâà3,93ª1
7700000000042720005
93ª2,93ª4,93ª5,93ª6,93ª7,93ª8,93ª9
7700000000042720006
93ª10,93ª11,93ª12,93ª13,93ª14,93ª15
7700000000042720007
93ª16,93ª17,93ª18,93ª19,93ª20,93ª21
7700000000042720008
93ª22,93ª23,93ª24,93ª25,93ª26,93ª27
7700000000042720009
93ª28,95áâà27,95ª1,95ª2,95ª3,95ª4,95ª5
7700000000042720010
95ª9,95ª10,95ª10áâà1,95ª11,95ª12,95ª13
7700000000042720011
95ª14,95ª15,95ª17,95ª18,95ª19,95ª20
7700000000042720012
95ª21,95ª22,95ª25,95ª26,97áâà15
7700000000042720013
97áâà65,97ª1,97ª2,97ª3,97ª4,97ª4áâà1
7700000000042720014
97ª5,97ª6,97ª7,97ª8,97ª9,97ª10,97ª11
7700000000042720015
97ª13,97ª13áâà2,97ª17,97ª18,97ª19
7700000000042720016
97ª20,97ª21,97ª22,97ª24,97ª25,97ª26
7700000000042720017
97ª27,97ª28,97ª28,97ª29,97ª30,97ª31
7700000000042720018
97ª32,97ª33,97ª34,97ª35,97ª36,97ª37
7700000000042720019
97ª38,97ª39,97ª40,97ª41,97ª43,97ª44
7700000000042720020
97ª45,97ª46,97ª47,97ª48,97ª49,97ª50
7700000000042720021
97ª51,97ª52,97ª53,97ª54,97ª55,97ª56
7700000000042720022
97ª57,97ª58,97ª59,97ª60,97ª61
7700000000042720023
97ª61áâà1,97ª62,97ª63,97ª64,99ª1,99ª2
7700000000042720024
99ª3,99ª4,99ª5,99ª6,99ª7,99ª8,99ª9
7700000000042720025
99ª10,99ª11,99ª12,99ª13,99ª14,99ª15
7700000000042720026
99ª16,99ª17,99ª18,99ª19,99ª20,99ª21
7700000000042720027
99ª22,99ª23,99ª24,99ª25,99ª26
7700000000042720028
2,2áâà1,6,6áâà1,6áâà2,8,8áâà1,11
7700000000042730001
11áâà1,11áâà2,13,16,16áâà1,16áâà2
7700000000042730002
17áâà2,17áâà3,17áâà4,19,19áâà1,19ª1,22
7700000000042730003
22áâà1,23,24,25,25áâà1,25áâà2,26,27,28
7700000000042730004
28áâà1,28áâà2,28ª1,28ª1áâà1,28ª2,29
7700000000042730005
29áâà1,30,30ª1,34,35,35áâà1,35ª1
7700000000042730006
35ª1áâà1,36,38,38ª1,38ª1áâà1,39,39áâà1
7700000000042730007
39ª1,39ª1áâà1,39ª2,40,40áâà1,40ª1,40ª2
7700000000042730008
40ª2áâà1,40ª3,41,41áâà1,42,42áâà1,42ª1
7700000000042730009
42ª1áâà1,42ª2,43,43áâà1,45,45ª1,47
7700000000042730010
47áâà1,47ª1,50,50ª1,50ª2,50ª2áâà1,52
7700000000042730011
52áâà1,52áâà2,52ª1,52ª1áâà1,52ª2,52ª3
7700000000042730012
52ª3áâà1,53,53áâà1,53áâà2,54,54ª1,55
7700000000042730013
57,58,58áâà1,58áâà2,61,61ª1,62,62áâà1
7700000000042730014
62áâà2,62ª1,62ª2,64,64áâà1,68,68ª1
7700000000042730015
68ª2,68ª3,68ª4,72,72áâà1,72ª1,72ª1áâà1
7700000000042730016
74,79ª1,79ª2,79ª3,79ª4,79ª5,79ª6,79ª7
7700000000042730017
79ª8,79ª9,79ª10,79ª11,79ª12,79ª13
7700000000042730018
79ª14,79ª15,79ª16,79ª17,79ª18,79ª19
7700000000042730019
79ª20,81áâà14,81ª1,81ª2,81ª3,81ª4,81ª5
7700000000042730020
81ª6,81ª7,81ª8,81ª9,81ª10,81ª11,81ª12
7700000000042730021
81ª13,81ª15,81ª16,81ª17,81ª18,81ª19
7700000000042730022
81ª20,81ª21,81ª22,81ª23,81ª24,81ª25
7700000000042730023
81ª26,81ª27,83áâà1,83ª2,83ª3,83ª4,83ª5
7700000000042730024
83ª6,83ª7,83ª8,83ª9,83ª10,83ª11,83ª12
7700000000042730025
83ª13,83ª14,83ª15,83ª16,83ª17,83ª18
7700000000042730026
83ª19,83ª20,83ª21,83ª22,83ª23,83ª24
7700000000042730027
83ª25,83ª26,83ª27,83ª28,86áâà6,89áâà49
7700000000042730028
89ª1,89ª4,89ª5,89ª6,89ª7,89ª9,89ª12
7700000000042730029
89ª12áâà1,89ª13,89ª14,89ª15,89ª16
7700000000042730030
89ª17,89ª18,89ª19,89ª20,89ª21,89ª22
7700000000042730031
89ª23,89ª24,89ª26,89ª27,89ª27áâà1
7700000000042730032
89ª28,89ª28áâà1,89ª30,89ª32,89ª33
7700000000042730033
89ª34,89ª35,89ª36,89ª39,89ª40,89ª41
7700000000042730034
89ª42,89ª44,89ª45,89ª46,89ª47
7700000000042730035
2ª1,4,6,8,10,10ª1,12,12ª1,14,16,18,20
7700000000042760001
20ª1,22,24,26,28
7700000000042760002
7,7áâà1,9,9áâà1,9áâà2,11
7700000000042770001
ª6,ª8
7700000000042790001
1,2,2ª1,3,3,4,5,6,7,8
7700000000042860001
2,5,8,27,27áâà1,27áâà2,27áâà3,27áâà4
7700000000042890001
7700000000042890002
7700000000042890003
7700000000042890004
7700000000042890005
7700000000042890006
27áâà26,27áâà27,27áâà28,27áâà29
7700000000042890007
27áâà32,27áâà33,27áâà34,27áâà35
7700000000042890008
27áâà36,27áâà37,27áâà38,27áâà39
7700000000042890009
27áâà40,27áâà41,27áâà42,27áâà45
7700000000042890010
27áâà47,27áâà48,27áâà49,27áâà50
7700000000042890011
27áâà51,27áâà52,27áâà57
7700000000042890012
ª1,ª2,ª3,ª3áâà2,ª4,ª5,ª6,ª6áâà2,ª7,ª9
7700000000042910001
ª1,ª2,ª3,ª3áâà2,ª4,ª5,ª6,ª7,ª8,ª8áâà2
7700000000042920001
ª9,113ª4
7700000000042920002
ª2,ª3,ª5,1áâà1,1ª5
7700000000042980001
ª1,ª1áâà4,ª4,ª5,ª6,ª6áâà2,ª7,ª9,ª11
7700000000042990001
ª11áâà2
7700000000042990002
3áâà1,3áâà2,5,6áâà8,7áâà1,7áâà7,9áâà1
7700000000043030001
7700000000043030002
7700000000043030003
16áâà3
7700000000043220001
1,2ª,3,6áâà2,6áâà2,7,8,8,9,10,11
7700000000043220002
11,12áâà1,12áâà2,12áâà3,15,16áâà1
7700000000043220003
16áâà2,17,18,19,22,23,23,26,26
7700000000043220004
27áâà1,27áâà2
7700000000043220005
7,7áâà1,7ª1,13ª1,13ª1áâà1,13ª2
7700000000043300001
13ª2áâà1,13ª2áâà2,15ª1,15ª2
7700000000043300002
7700000000043320001
7700000000043320002
7700000000043320003
6áâà15,6áâà16,6áâà17,6áâà18,6áâà21
7700000000043320004
6áâà22,6áâà23,6áâà25,6áâà26,6áâà27
7700000000043320005
7700000000043320006
6áâà33,6áâà35,6áâà36,6áâà37,6áâà38
7700000000043320007
6áâà39,6áâà40,8,8áâà2,8áâà3,8áâà4
7700000000043320008
8áâà5,8áâà6,8áâà9,8áâà10,8áâà11,8áâà12
7700000000043320009
ª3áâà1,ª7,ª8
7700000000043360001
8áâà1
7700000000043440001
1,2ª1,2,3,4ª2,5ª1,5ª2,5ª3,5,6,6,7ª1
7700000000043470001
7ª2,7,8,8áâà1,8áâà2,8,8,9,9,10ª1
7700000000043470003
10ª2,10,13,13áâà1
7700000000043470004
15ª1áâà2
7700000000043470002
14ª1,14ª2,14ª3,15ª1,15ª2,15,15,16ª1
7700000000043470005
16ª2,16,17ª1,17ª2,17,18ª1,18,19ª1
7700000000043470006
19ª2,19ª3,19,20áâà1,20ª1,20ª2,20
7700000000043470007
21ª1,21ª2,21ª3,21ª4,22ª1,22ª2,22ª3,22
7700000000043470008
22,22,22,24áâà1,25,25áâà1,27ª1,27ª2
7700000000043470009
2,2áâà1,2ª1,2ª1áâà1,3,3áâà2,3ª1,4,5
7700000000043480001
5áâà1,5ª1,6,7,8,10,10áâà1,10ª1
7700000000043480002
10ª1áâà1,10ª1áâà2,10ª2,12
7700000000043480003
2áâà1,2áâà6,2áâà7,6,6áâà1,7áâà1,7áâà2
7700000000043500001
7áâà5,10,10áâà1,12áâà1,12áâà2
7700000000043500002
1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà5,1áâà10
7700000000044960001
1áâà12,1áâà13,1áâà14,1áâà15,1áâà17
7700000000044960002
1áâà18,1áâà19,1áâà20,1áâà23,1áâà24
7700000000044960003
1áâà27,1áâà28,1áâà29,1áâà30,1áâà31
7700000000044960004
1áâà32,1áâà40,1áâà62,1áâà64,1áâà86
7700000000044960005
27,27áâà1,27áâà2,27áâà3,27áâà4,27áâà5
7700000000044990001
1,1ª1,1ª2,1ª3,1ª3áâà1,3,3áâà1,5,5áâà1
7700000000045030001
5áâà2,5ª1,7,7áâà1,7ª1,9,9áâà1,9ª1,19
7700000000045030002
ª1,ª3,ª3áâà1,ª4,ª5,ª5áâà1,ª5,ª6
7700000000045050001
ª16áâà1,3
7700000000045050002
6áâà1,10ª1,14ª1,14ª1áâà1,14ª1áâà2,16
7700000000045070001
16áâà1,16áâà2,18áâà1,18ª1,18ª2,20ª1
7700000000045070002
20,22áâà1,22áâà2,22áâà3,22áâà4,22ª1
7700000000045070003
22ª2,22ª3,22ª4
7700000000045070004
7700000000045070005
2,2ª1,3,4,4ª1,4ª1áâà1,5,5áâà2,6,6ª1,7
7700000000045080001
7ª1,7ª2,7ª3,7ª4,7ª4áâà1,7ª5,8/1,9,9ª1
7700000000045080002
9ª2,9ª3,9ª4,9ª5,9ª5áâà1,10,10áâà1,10ª1
7700000000045080003
10ª1áâà1,11,11áâà1,11ª1,11ª2,11ª3,12
7700000000045080004
12ª1,12ª1áâà1,13/2,14,14áâà1,15,15áâà1
7700000000045080005
16,16ª1,16ª2,18,18áâà1,19,19áâà1,23,25
7700000000045080006
7700000000045080007
1,1áâà1,1áâà2,2,2ª1,2ª1áâà1,3,4,5
7700000000045100001
5áâà1,6,6áâà1,6ª1,7,7ª1,8,8ª1
7700000000045100002
2,2áâà1,2ª1,4,4áâà1,4ª1,6áâà1,6ª1,8,8ª1
7700000000045110001
8,10,10áâà1,12,12ª1,14,14áâà1,16
7700000000045120001
16áâà1,16ª1,18,18áâà1
7700000000045120002
1ª1,1ª2,1ª3,2áâà1,3ª1,3ª2,3ª3,3ª4,3ª5
7700000000045130001
5ª2áâà1,14,14áâà1,14áâà2,14áâà3,23áâà1
7700000000045140001
25,25ª1,25ª2,25ª2áâà1,27,27áâà1,27ª2
7700000000045140002
29,31,31áâà1,33,35,35ª1,35ª1áâà1
7700000000045140003
35ª1áâà2,35ª2,35ª2áâà1,39,43,43áâà1,45
7700000000045140004
45áâà1,47,47áâà1,51,51áâà1,51áâà2
7700000000045140005
7700000000045140006
51áâà8
7700000000045140007
2,3,3ª1,3ª2,4,5,5áâà1,6,6áâà1,6áâà2
7700000000045150001
6ª1,8,8áâà1,8áâà2,8ª2,9,9ª1,10,10áâà1
7700000000045150002
10áâà2,10áâà3,11,11ª1,12/4,13,13áâà1
7700000000045150003
14,14áâà1,14áâà2
7700000000045150004
8áâà2,8áâà13,8áâà14
7700000000045190001
2,2ª1,2ª1áâà1,4,4ª1,4ª2,4ª2áâà1,6/19
7700000000045200001
8áâà1,8áâà2,14,14áâà1,14áâà2,14áâà3
7700000000045200002
14ª1,16áâà1,16/114,20,20ª1áâà1
7700000000045200003
20ª1áâà2,22,22áâà1,22ª1,22ª2,22ª2áâà1
7700000000045200004
24,24áâà1,25,25áâà1,25áâà2,25ª1
7700000000045200005
25ª1áâà1,25ª2,25ª3,25ª4,25ª5,25ª5áâà1
7700000000045200006
25ª6,25ª7,25ª8,25ª8áâà1,25ª9,25ª15
7700000000045200007
25ª16,25ª17,25ª18,25ª19,25ª20,25ª21
7700000000045200008
25ª22,25ª23,25ª24,25ª25,25ª25áâà1
7700000000045200009
25ª26,26,26áâà1,26áâà2,26ª1,27,27ª1
7700000000045200010
27ª1áâà1,27ª2,27ª3,27ª4,27ª5,28,28ª1
7700000000045200011
29,29áâà1,29áâà2,29ª1,29ª2,29ª3
7700000000045200012
29ª3áâà1,29ª3áâà2,29ª10,29ª11,29ª12
7700000000045200013
29ª13,29ª14,29ª16,29ª17,29ª18,29ª19
7700000000045200014
2áâà11
7700000000045300001
124489
7700000000045420001
10áâà6,10áâà7,10áâà8,23ª1,23ª3,25ª1
7700000000045420002
25ª1áâà1,25ª1áâà2,25ª2,27,27áâà1,27áâà2
7700000000045420003
29,29áâà1,33,33áâà1,35,35áâà1,35áâà2
7700000000045420004
1,1áâà1,3ª1,3ª2,3,3,5ª1,5ª2,5ª3,5
7700000000045420005
7ª1,7ª2,9ª1,9ª2,9,9,11,11,12,13,13
7700000000045420006
37,39ª1,39ª1áâà1,39ª2,39ª3,41ª1
7700000000045420007
41ª1áâà1,41ª1áâà2,41ª2,43,45,45áâà1
7700000000045420008
45áâà2
7700000000045420009
7,23,40,48áâà12,48áâà13
7700000000050010001
2,2ª1,9
7700000000050040001
9,9áâà1,13,17,23,23áâà1,23ª1,23ª2
7700000000050050001
23ª2áâà1,23ª2áâà2,27,27ª1,29,33,33áâà1
7700000000050050002
39,41,41áâà1,41ª1,49,49áâà1,49áâà2
7700000000050050003
49ª1,49ª2,49ª3,49ª4,55,57,57áâà1,57ª1
7700000000050050004
57ª2,57ª3,61,61áâà1
7700000000050050005
3áâà1,3áâà2,8,8áâà1,8ª1,8ª1áâà1,8ª2,10
7700000000050080001
21áâà1,21áâà2,33áâà6,33ª1,33ª2,33ª3
7700000000050080002
33ª4,33ª5,33ª6,33ª7,33ª8,33ª9,33ª10
7700000000050080003
33ª11,33ª12,33ª13,33ª14,33ª15,33ª16
7700000000050080004
33ª17,33ª18,33ª19,33ª20,33ª21,33ª22
7700000000050080005
33ª23,33ª24,33ª25,33ª26,33ª27,33ª28
7700000000050080006
33ª29,33ª30,33ª31,33ª32,33ª33,33ª34
7700000000050080007
33ª35,33ª36,35áâà4,35ª1,35ª2,35ª3,35ª5
7700000000050080008
43ª1,43ª2,43ª3,43ª4,43ª4áâà1,43ª5,43ª6
7700000000050080009
43ª7,43ª8,43ª9,43ª10,43ª11,43ª12,43ª13
7700000000050080010
43ª14,43ª15,43ª17,43ª18,43ª19,44áâà1
7700000000050080011
7700000000050080012
52áâà8,52ª1,52ª2,52ª3,52ª4,52ª5,52ª6
7700000000050080013
52ª7,52ª10,52ª11,52ª12,52ª13,52ª15
7700000000050080014
52ª16,52ª17,52ª19,52ª20,52ª21
7700000000050080015
52ª21áâà1,52ª22,52ª25,52ª26,52ª27
7700000000050080016
52ª28,52ª29,52ª30,52ª31,52ª32,52ª34
7700000000050080017
52ª35,52ª36,52ª37,54ª1,54ª2,54ª3,54ª4
7700000000050080018
54ª7,54ª8,54ª9,54ª10,54ª11,56ª1,56ª2
7700000000050080019
56ª5,56ª6,56ª7,56ª8,56ª9,56ª10,58ª1
7700000000050080020
1,1áâà2,2,3,4,5,6,6áâà2,6áâà3,6áâà4,7
7700000000050090001
7áâà1,8,9,10,11,11áâà2,13áâà1,13áâà2
7700000000050090002
13áâà3,13áâà4,13áâà4,13áâà5,13áâà6
7700000000050090003
13áâà7,13áâà8,13áâà9,13áâà11
7700000000050090004
2/8áâà1,3áâà1,4áâà2,4áâà4,4áâà5,4áâà6
7700000000070020001
4áâà12,4_6áâà14,5/8,5/8áâà1
7700000000070020002
5/8áâà2,5/8áâà3,5/8áâà4,6áâà1,7,8
7700000000070020003
9áâà1,9áâà2,9áâà3,9áâà8,11áâà1,11áâà3
7700000000070020004
12/8áâà1,12/8áâà2
7700000000070020005
1,8/1,10,11,11áâà1,11áâà2,12,14,14ª
7700000000070030001
16/12,20,21,22,23,24
7700000000070030002
2,3,5,5áâà2,6áâà1,6áâà2,6áâà3,6áâà4,7
7700000000070050001
7,8áâà3,8áâà4,9,9áâà3
7700000000070050002
3/16áâà1,4áâà1,4áâà2,4áâà3,7,8áâà1,9
7700000000070060001
11áâà1,11áâà2,13áâà1,13áâà2,13áâà11
7700000000070060002
15/5,16,18,20áâà1,20áâà2,20áâà3,22áâà1
7700000000070060003
22áâà2
7700000000070060004
1/2áâà1,2,4,5,5,6áâà1,6áâà2,7,8áâà1
7700000000070070001
8áâà2,8áâà4,8áâà7,9,10áâà1,10áâà2
7700000000070070002
2/4áâà2,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000070080001
3áâà8,4,4áâà5,5/4áâà5,5/4áâà8,5/4áâà9
7700000000070080002
5/4áâà10,5/4áâà11,5/4áâà12,6/1,8,8áâà8
7700000000070080003
9/1,9/1áâà4,9/1áâà5,9/1áâà7,9/1áâà9
7700000000070080004
9/1áâà10,9/1áâà14,9/1áâà16,9/1áâà16
7700000000070080005
9/1áâà17,9/1áâà22,10áâà1,10áâà2,10áâà3
7700000000070080006
10áâà4,12áâà5,12áâà7,12áâà10
7700000000070080007
2,3,4áâà4,4áâà6,5,6,8,9áâà1,9áâà3,10
7700000000070100001
14,16,16áâà3,17áâà2,17áâà3,17áâà4
7700000000070100002
17áâà5,17ª1,19áâà1,19áâà5,19áâà6
7700000000070100003
19áâà7,19áâà8,19áâà10,19áâà12,19áâà13
7700000000070100004
19áâà15,20,25ª,25ª,25áâà1,25áâà3
7700000000070100005
25áâà5
7700000000070100006
38,40,40áâà2
7700000000070100007
3/1áâà1,4áâà3,4áâà4,7áâà1,9,11,11áâà1
7700000000070110001
1,2,3áâà1,3áâà3,4,4áâà2,4áâà3,4áâà4
7700000000070120001
4áâà5,4áâà5,4áâà6,4áâà7,4áâà8,5,6
7700000000070120002
7/4áâà1,9/3áâà1,9/3áâà2,11áâà1,11áâà2
7700000000070120003
12áâà1,12áâà3,12áâà6,12áâà7,12áâà8,14
7700000000070120004
15áâà1,16áâà1,16áâà2,17,18/2áâà1
7700000000070120005
18/2áâà2,20/1áâà1,22,24
7700000000070120006
21,23áâà1,23áâà2,25áâà1,25áâà2,26ª1
7700000000070120007
27/6,28,28,29/7áâà1,29/7áâà2,29/7áâà3
7700000000070120008
30áâà1,30áâà2,30áâà3,30áâà4,30,34
7700000000070120009
35/5áâà1,35/5áâà2,36áâà1,38,38áâà2
7700000000070120010
42áâà1,42áâà2,44/2áâà1,44/2áâà2,46áâà1
7700000000070130001
46áâà2,46áâà3,48áâà1,48áâà2,48áâà3
7700000000070130002
48áâà4,48áâà5,50/53áâà1,50/53áâà2
7700000000070130003
52/55áâà1,52/55áâà2,52/55áâà3
7700000000070130004
52/55áâà4,52/55áâà7,52/55áâà10
7700000000070130005
52/55áâà13
7700000000070130006
5áâà1,7áâà1,7áâà2,8áâà4,8/1áâà1
7700000000070130007
8/1áâà2,8/1áâà4,9áâà1,9áâà2,10áâà1
7700000000070130008
10áâà2,10áâà3,11áâà1,11áâà2,11áâà3,14
7700000000070130009
14_16áâà2,18,20,21/17áâà1,21/17áâà2,22
7700000000070130010
23áâà1,23áâà2,23áâà4,23áâà10,23
7700000000070130011
24áâà1,24áâà2,24áâà3,25áâà1,25áâà2
7700000000070130012
25áâà1,25áâà2,26,27,28áâà1,28áâà2
7700000000070130013
28áâà3,29/36áâà1,29/36áâà2,30_36áâà1
7700000000070130014
30_36áâà2,30_36áâà3,31/29,31/29áâà2
7700000000070130015
33áâà1,33áâà3,33áâà4,33áâà5,33áâà7
7700000000070130016
33áâà8,38áâà1,40áâà1,40áâà2,40áâà3
7700000000070130017
40áâà5
7700000000070130018
7700000000070130019
123260
9/6,9/6áâà2,11áâà1,11áâà4,13áâà1,19,21
7700000000070140001
7700000000070140002
3áâà1,3áâà2,3áâà5,4,5áâà1,5áâà3,5áâà4
7700000000070140004
5áâà5,5áâà6,5áâà7,7áâà1,7ª2,8_10,12
7700000000070140005
14/3,16áâà1,16áâà2,18,20,22,24áâà1
7700000000070140006
24áâà3
7700000000070140007
7700000000070140003
2/1áâà1,2/1áâà2,3,4,5,6/2áâà1,6/2áâà2,7
7700000000070150001
2ª1,2ª2,2ª3,2ª4,2ª4áâà2,3,3áâà2,4,4
7700000000070160001
4áâà2,4ª1,4áâà1,5,6áâà3,6ª1,6ª2,6ª3
7700000000070160002
1áâà1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà7
7700000000070170001
2áâà10,2áâà21,3,4,5áâà1,5áâà2,6áâà15
7700000000070170002
7áâà1,7áâà2,7áâà3,8ª1,8ª2,8ª3,8/12áâà3
7700000000070170003
8/12áâà4,8/12áâà7,8/12áâà8,13áâà1
7700000000070170004
13áâà2,13áâà4,15,17,19ª1,19ª2,19ª3
7700000000070170005
19ª4,19ª5,21
7700000000070170006
12/1,14áâà1,14áâà2,14áâà3
7700000000070180001
18áâà1,18áâà1,18áâà2,20áâà2,22
7700000000070180002
24/15áâà1,24/15áâà3,26/17áâà1
7700000000070180003
7700000000070180004
7áâà3,11áâà1,11áâà1,13áâà2,13/16áâà1
7700000000070180005
17áâà1,17áâà2,19áâà1,19áâà2,19áâà3
7700000000070180006
19áâà4,19áâà5,19áâà7,21áâà1,21áâà2
7700000000070180007
32,32áâà1,32áâà2,32áâà3,33/13áâà1
7700000000070190001
33/13áâà2,33/13áâà3,35áâà1,35áâà2
7700000000070190002
35áâà3,37áâà1,37áâà2,37áâà3,38,39,40
7700000000070190004
40áâà7,42áâà3,43,43áâà1,43áâà2,43áâà3
7700000000070190005
45,46áâà1,46áâà2,46áâà3,46áâà4,50,52
7700000000070190006
54,56,58áâà1,58/2
7700000000070190007
7700000000070190003
119134
1,3,4áâà1,5,5/6áâà2,6,7,7áâà2,8,9,12
7700000000070190008
14,15/20áâà1,15/20áâà2,17/2áâà1
7700000000070190009
17/2áâà2,18,19,21,22,22áâà1,22áâà2
7700000000070190010
22ª3,23,25,26,26áâà2,27,29,31,31áâà3
7700000000070190011
36/71áâà1
7700000000070200001
1áâà1,1áâà2,4áâà1,4áâà3,4áâà4,4áâà5
7700000000070210001
4áâà6,4áâà7,4áâà8,5,6,7,8áâà1,8áâà2
7700000000070210002
10áâà4,10áâà1,10áâà3,11,13áâà1
7700000000070210003
13áâà2,13áâà3,15,17áâà1,17áâà2,17áâà3
7700000000070210004
18áâà4,18ª1,19áâà1,19áâà2,20áâà1
7700000000070210005
20áâà2,20áâà2,20áâà3,21áâà1,21áâà2
7700000000070210006
7700000000070210007
22áâà6,24
7700000000070210008
3,4,5áâà1,5áâà2,6,7,8,9,10/7,11,13áâà4
7700000000070220001
7700000000070220002
17áâà1,17áâà2,18,18,19,21,22_26áâà1
7700000000070220003
22_26áâà2,22_26áâà3,25,27,28áâà1
7700000000070220004
28áâà2,28áâà3
7700000000070220005
7700000000070230001
5áâà1,5áâà6,6áâà2,6áâà3,7áâà1,7áâà2
7700000000070240001
8áâà1,9áâà3,9ª1,9ª2,10áâà2,10áâà5
7700000000070240002
11/2áâà1,11,12áâà1,12áâà2,12áâà5
7700000000070240003
13áâà1,14/2,14/2áâà2,14/2áâà3,14/2áâà4
7700000000070240004
14/2áâà5,15,15áâà1,15áâà2,15áâà3
7700000000070240005
15áâà10,15áâà11,15áâà19,15áâà20
7700000000070240006
15áâà21,15áâà4,15áâà15
7700000000070240007
16/1,16/1áâà1,16/1áâà5,16/1áâà5
7700000000070240008
16/1áâà6,16/1áâà7,16/1áâà8,17áâà1
7700000000070240009
17áâà2,17áâà3,17áâà4,17áâà5,17áâà6,18
7700000000070240010
18áâà1,18áâà2,18áâà3,18áâà4,18áâà8
7700000000070240011
18áâà12,18áâà13,18áâà18,19áâà1,19áâà2
7700000000070240012
19áâà5,19áâà6,19áâà7,19áâà8,19áâà10
7700000000070240013
19áâà12,19áâà16,20áâà1,20áâà14,20áâà16
7700000000070240014
20áâà25,20áâà27,20áâà37,20ª1,20ª2,20ª3
7700000000070240015
20ª4,20ª5,20ª8,20ª9,20ª12,21/4áâà1
7700000000070240016
21/4áâà2,21/4áâà3,21/4áâà4,21/4áâà5
7700000000070240017
21/4áâà6,21/4áâà7,21/4áâà8,21/4áâà9
7700000000070240018
21/4áâà10,21/4áâà11,21/4áâà12
7700000000070240019
21/4áâà18,21/4áâà22,21/4áâà24
7700000000070240020
21/4áâà26,22,22ªáâà2,22ªáâà3
7700000000070240021
23/9áâà1,23/9áâà2,24,24áâà2,24áâà7
7700000000070240022
25áâà1,25áâà2,25áâà5,26,28/2,30/1
7700000000070240023
30/1áâà2,31,31áâà2,32,32áâà1,33,34,35
7700000000070240024
35áâà2,36,36áâà2,38,38áâà1,38/2áâà1
7700000000070240025
1áâà2,1áâà3
7700000000070250001
1/52ª1,1/52ª2,1/52ª3,1/52ª4
7700000000070260001
7700000000070260002
2áâà9,2áâà11,2áâà19,2áâà22,2áâà24
7700000000070260003
2áâà32,2áâà35,2áâà38,2áâà45,2áâà46
7700000000070260004
2áâà112
7700000000070260005
13,15áâà1
7700000000070270001
8áâà2,8áâà4,10/2áâà1,21,23áâà1
7700000000070270002
3/8áâà1,3/8áâà2,3/8áâà3,3/8áâà4
7700000000070270003
3/8áâà5,4,5/2,6/1áâà1,11/10áâà1
7700000000070270004
7700000000070270005
109097
7/3áâà1
7700000000070270006
109289
2/1,4áâà1,4áâà2
7700000000070280001
1áâà1,1áâà2,3áâà1,3áâà4,3/26áâà2
7700000000070280002
1áâà1,1áâà6,3áâà1,3/5áâà1,3/5áâà36
7700000000070290001
3áâà2,4,5áâà3,6áâà1,6áâà2,7áâà1,9áâà1
7700000000070290002
1,2áâà1
7700000000070300001
4áâà5,4/22ª,4/22ª,4/22ª,4/22áâà4
7700000000070310001
4/22áâà8,4/22áâà9,22áâà1,22áâà1
7700000000070310002
24áâà1,26,26/55áâà6,26/55áâà7,28áâà1
7700000000070310003
28áâà2,28áâà8,32áâà1,32áâà9,32_34,36
7700000000070310004
38áâà1,38áâà2,38áâà3,38áâà12,40_42áâà3
7700000000070310005
46_50áâà1,46_50áâà3,52áâà1,52áâà2
7700000000070310006
52áâà3,52áâà4,52áâà5,52áâà6,52áâà7
7700000000070310007
52áâà8,52áâà10,52áâà13
7700000000070310008
3,4áâà1,4áâà2,5,6,6áâà2,8,8áâà2,10
7700000000070330001
11áâà1,11áâà2,11áâà3,11áâà6,11áâà9
7700000000070330002
11áâà11,11/6áâà10,12/6,13áâà1,13áâà3
7700000000070330003
13áâà4,13áâà5,14,14áâà2,14áâà3,16,18
7700000000070330004
16/8,18áâà1,20,22,24,25,26,27áâà1
7700000000070340001
27áâà1,27áâà2,27áâà3,27áâà4,30,31
7700000000070340002
32/9,33,35_37áâà4,36áâà1,39,41,41_,41_
7700000000070340003
3áâà3,3áâà5,4,5,6,6áâà2,7áâà1,7áâà2
7700000000070340004
7áâà3,8áâà1,8áâà2,8áâà3,9,11_13
7700000000070340005
11_13áâà2,12áâà1,12áâà2,14,15áâà1
7700000000070340006
15áâà5,15áâà7,15áâà8,15áâà9,15áâà10,17
7700000000070340007
17áâà1,17áâà3,17/7
7700000000070340008
3áâà1,3áâà2,5/23áâà1,7/21,8áâà1,8áâà2,10
7700000000070350001
1,1áâà1,2/14áâà1,2/14áâà2,2/14áâà3
7700000000070360001
2/14áâà4,2/14áâà5,2/14áâà6,2/14áâà8
7700000000070360002
2/14áâà9,2/14áâà10,2/14áâà15,2áâà1,4
7700000000070360003
4áâà2,4áâà3,6,6áâà22,7,11áâà1,15/2áâà1
7700000000070360004
15/2áâà2,15/2áâà3,15/2áâà4,17,17áâà2
7700000000070360005
8/10áâà4,8_10áâà1,8_10áâà2,12,19
7700000000070360006
19áâà1,19áâà2,19áâà5,19áâà6,21áâà1
7700000000070360007
21áâà2,21áâà3,21áâà4
7700000000070360008
3,5/7,5_7áâà2,5_7áâà4,5_7áâà5,5_7áâà6
7700000000070370001
5_7áâà7,6,8,10,10/15áâà4
7700000000070370002
13áâà1,15áâà2,17áâà1,17áâà2,19/6,23,25
7700000000070380001
27áâà1,27áâà2,27áâà12,31áâà1,31áâà2
7700000000070380002
16áâà1,16áâà2,22áâà1,22áâà2
7700000000070380004
1/9áâà1,5áâà1,5áâà2,5áâà3,5áâà5,5áâà6
7700000000070380005
7700000000070380006
4,6,8,8áâà2,10,12/2,14áâà2
7700000000070380007
3,5áâà1,5áâà2,5áâà3,5áâà5,5áâà6,5áâà7
7700000000070390001
5áâà8,5áâà10
7700000000070390002
7700000000070400001
9áâà1,9áâà2,9áâà3,9áâà4,10áâà1,10áâà2
7700000000070400002
11áâà1,11áâà2,12,13áâà1,13áâà2
7700000000070400003
13áâà3,15áâà1,15áâà2,15áâà3
7700000000070400004
1áâà9,1ª1,1ª2,1ª3,1ª4,1ª5,1ª6,1
7700000000070410001
1áâà1,2,2áâà1,2áâà2,2áâà5,2ª1,2ª2,2ª3
7700000000070410002
2ª4,2,2,2áâà1,3ª1,3ª2,3ª3,3ª4,3ª5
7700000000070410003
3ª5áâà1,3,4ª1,4ª2,5áâà1,5áâà2,5áâà3
7700000000070410004
7700000000070410005
7700000000070410006
7700000000070410007
7700000000070410008
7700000000070410009
7700000000070410010
7700000000070410011
5áâà40,5áâà41,5áâà42,6,7/20,8,9,9
7700000000070410012
9áâà1,10,10áâà1,11,11,11áâà2,13
7700000000070410013
13ª1,15ª1,15ª2,16/18,17ª1,17ª2
7700000000070410014
17ª2áâà1,17ª2áâà2,19,20,20áâà2,21,23
7700000000070410015
23áâà2,25ª1,25ª2,25,25áâà2,25áâà1
7700000000070410016
25áâà1,28áâà4,28ª1,28ª2,28ª3,28ª4
7700000000070410017
28ª5,30ª1,30ª1áâà1,30ª2,32ª1,32ª2,32ª3
7700000000070410018
7700000000070420001
7,8,8/3áâà1,9,10,11/12áâà1,11/12áâà2
7700000000070420002
11/12áâà3,11/12áâà4,11/12áâà5,12
7700000000070420003
12áâà4,12áâà1,12áâà2,13áâà1,13áâà2
7700000000070420004
15/16,17,17áâà3,25
7700000000070420005
5,7,7áâà3
7700000000070420006
3/6áâà4,3/6áâà6,3/6áâà10,5áâà1,7áâà1
7700000000070430001
9áâà1,9áâà2,9áâà4,11/1áâà1
7700000000070430002
15áâà2,15áâà4,17,17áâà2,19áâà1,19áâà2
7700000000070430003
19áâà3,21áâà1,21áâà2,21áâà3,21áâà4
7700000000070430004
21áâà5,21áâà6,23áâà1,25áâà1,25áâà2
7700000000070430005
25áâà9,27áâà4,27/1áâà1
7700000000070430006
3ª1,4áâà1,4áâà2,5áâà2,5áâà8,6,6áâà1
7700000000070450001
6áâà2,6áâà3,7,7,9,12áâà1,12áâà2,14/23
7700000000070450002
14/23áâà2,14/23áâà3
7700000000070450003
2/18áâà1,2/18áâà2,2/18áâà3,2/18áâà4
7700000000070450004
2/18áâà6,2/18áâà7
7700000000070450005
10,14áâà1,14áâà2,14áâà4,14ª2,16áâà1
7700000000070460001
1áâà1,1áâà2,3áâà1,4áâà1,4áâà2,4áâà3
7700000000070470001
4áâà4,5,6áâà1,6áâà2,7áâà1,7áâà2
7700000000070470002
8/2áâà1,8/2áâà2,8/2áâà3,8/2áâà4
7700000000070470003
8/2áâà6,9,9áâà2,9áâà3,10áâà1,10áâà2
7700000000070470004
10,11/16áâà1,11/16áâà2,11/16áâà3
7700000000070470005
11/16áâà4,11/16áâà5,11/16áâà7,12/8áâà1
7700000000070470006
15áâà3,15áâà2,15áâà9,17áâà1
7700000000070470007
1,2,2áâà2,2,3,3áâà6,3_,3,4,4áâà2
7700000000070480001
5áâà5,5áâà6,5ª1,5ª2,5ª3,5ª3áâà1
7700000000070480002
5ª3áâà2,5ª4,6,6áâà2,6áâà3,7ª1,7ª1áâà1
7700000000070480003
7ª2,7ª2áâà1,7ª4,8áâà4,8ª1,8ª1áâà1,8ª2
7700000000070480004
8ª2áâà1,8,9,9ª2,10áâà4,10ª1,10ª1áâà1
7700000000070480005
10ª2,10ª3,10ª3áâà2,10,10,11,15
7700000000070480006
15áâà2,15áâà3,15áâà4,15,17,19,19áâà2
7700000000070480007
21,21áâà2,23
7700000000070480008
12,12áâà12,12áâà13,12ª1,12ª2,12ª3,12ª4
7700000000070480009
12ª5,12ª5áâà2,12ª6,12ª7,12ª8,12ª9
7700000000070480010
12ª9áâà2,12ª10,12ª11,14,14,16ª1
7700000000070480011
16ª1áâà1,16ª1,16ª2,16ª3,16ª4,16ª5
7700000000070480012
16ª6,16ª6áâà1,18áâà5,18ª1,18ª2
7700000000070480013
18ª2áâà1,18ª2áâà3,18ª2áâà4,18,20áâà3
7700000000070480014
20ª1,20ª1áâà1,20ª2
7700000000070480015
4,5áâà4,5áâà5,6,8,10,12áâà1,12áâà2,14
7700000000070490001
7700000000070490002
2/4
7700000000070490003
3,4áâà1,5,6,7,8,9,10,11,12,15,16,17,18
7700000000070500001
19,20/17,21/24,21/24áâà2,22áâà2
7700000000070500002
1/13áâà1,3/7áâà1,3/7áâà1,3/7áâà1
7700000000070510001
3/7áâà1,3/7áâà2,3/7áâà3,5áâà5,9áâà1
7700000000070510002
9áâà2,11,13áâà1,13áâà2,13áâà3,13áâà5
7700000000070510003
13áâà1,15/16áâà1,17áâà1,17áâà3,17áâà5
7700000000070510004
7700000000070510005
2/1áâà1,2/1áâà2,2/1áâà3,2/1áâà9,4áâà1
7700000000070510006
4áâà2,4áâà5,6,6áâà2,8,10áâà1,10áâà2
7700000000070510007
10áâà3,10áâà5,12áâà1,12áâà3,14/2áâà1
7700000000070510008
14/2áâà3,16,18/18áâà1,18/18áâà3,20áâà3
7700000000070510009
20/1áâà1,20/1áâà2,22/1áâà1,22/1áâà2
7700000000070510010
22áâà1,22áâà2,22áâà4,22áâà7
7700000000070510011
22áâà8,22áâà10,22áâà12,22áâà16
7700000000070510012
22áâà18
7700000000070510013
25áâà1,25áâà2,27áâà1,27áâà2,27áâà5
7700000000070510014
27áâà6,27áâà20,27áâà21,29,31áâà1
7700000000070510015
31áâà1,31áâà2,31áâà3,31áâà4,33
7700000000070510016
35/17áâà1,37áâà1,37áâà3,37/15áâà4
7700000000070510017
37/15áâà11,39áâà1,39áâà3,41áâà1,41áâà2
7700000000070510018
41áâà3,43áâà1,43áâà2,43áâà3,43áâà6
7700000000070510019
43áâà7,43áâà8,43,45áâà1,45áâà2,45áâà4
7700000000070510020
45áâà5,45áâà6,45áâà7,47,47
7700000000070510021
24/2áâà1,26/1áâà1,26/1áâà2,26/1áâà3
7700000000070510022
26/1áâà4,28áâà1,28áâà2,28áâà3,28áâà4
7700000000070510023
28áâà5,28áâà7,30,32,34,38áâà1,38áâà5
7700000000070510024
38,40áâà1,40áâà2,40áâà2,40áâà5,40
7700000000070510025
40áâà6,42áâà1,42áâà2,42áâà5,42áâà6
7700000000070510026
42áâà10,42áâà13,44,46áâà6,48áâà1
7700000000070510027
48áâà2,50/2áâà1,50/2áâà2,50/2áâà5
7700000000070510028
50/2áâà8,50/2áâà17,50/2áâà23
7700000000070510029
4áâà1,4áâà2,4áâà2,6áâà1,6áâà2,7áâà1
7700000000070520001
7áâà2,7áâà3,7áâà4,7áâà5,7áâà6,8/4áâà1
7700000000070520002
8/4áâà7,10
7700000000070520003
3/6áâà1,5/7áâà1,5/7áâà2,8/15áâà1
7700000000070530001
8/15áâà2,8/15áâà3,10/2áâà1,11áâà2
7700000000070530002
7700000000070530003
11áâà10,11/4ª1áâà4,12/1áâà1,13/5áâà2
7700000000070530004
14áâà1,15/8áâà3,17,17áâà1,17áâà3
7700000000070530005
18/1áâà1,19,19áâà1,20/8áâà1,20/8áâà3
7700000000070530006
20/8áâà4,20/8áâà5,20/8áâà6,20/8áâà7
7700000000070530007
20/8áâà8,20/8áâà9,20/8áâà12,20/8áâà14
7700000000070530008
20/8áâà15,20/8áâà16,20/8áâà17,23/5áâà2
7700000000070530009
25,27áâà1,27áâà2,27áâà5,29áâà1,29áâà2
7700000000070530010
7700000000070530011
5,7áâà1,7áâà2,7áâà3
7700000000070540001
61,62áâà2,63ª2,63ª2áâà1,72,74ª1,74ª2
7700000000070550001
75,75áâà1,79ª1,90
7700000000070550002
28,30,30ª1,30ª2,30ª3,30ª3áâà2,32
7700000000070550003
32áâà2,32áâà3,32ª1áâà1,34,36,38,38áâà1
7700000000070550004
38ª1,40,42áâà1,42áâà2,44,44áâà3,46,47
7700000000070550005
48,48áâà2,48ª1,49ª1,49ª1áâà3,49ª2,50
7700000000070550006
51,51áâà2,51ª2,51ª3,51ª4,52,52ª1áâà1
7700000000070550007
52ª2áâà1,52ª2áâà2,52ª2áâà3,53ª1,53ª2
7700000000070550008
54,55,55áâà2,56,57,57áâà2,58,58áâà1
7700000000070550009
58ª1,59,59áâà1,60,60áâà2,61áâà2,62
7700000000070550010
64ª1,64ª2,66,68ª1,68ª2,70áâà2,70ª1
7700000000070550011
2áâà1,2áâà2,2áâà3,2áâà5,2áâà6
7700000000070550012
1,1áâà1,1áâà10,1áâà16,1áâà26,2,2ª2
7700000000070550013
2ª2áâà1,2ª2áâà2,2ª2áâà4,2ª2áâà5
7700000000070550014
2ª2áâà6,2ª2áâà8,2ª2áâà10,2ª2áâà11,2
7700000000070550015
2áâà7,2áâà8,2áâà9,2áâà10,2áâà11
7700000000070550016
2áâà12,2áâà13,2áâà14,2áâà15
7700000000070550017
2áâà16,2áâà17,2áâà18,2áâà19
7700000000070550018
2áâà20,2áâà21,2áâà22,2áâà23
7700000000070550019
2áâà24,2áâà25,2áâà26,2áâà27
7700000000070550020
10áâà1,11ª1,12ª1,12ª2,12ª3,12ª4,13
7700000000070550021
14ª1,14ª2,14ª2áâà1,15ª1,15ª2,15ª2áâà2
7700000000070550022
16ª1,16ª2,16ª3,16ª4,16ª4áâà1,16ª5,16ª6
7700000000070550023
16ª7,16ª7áâà1,17,17ª1,17ª2,17ª3
7700000000070550024
17ª3áâà2,17ª4,18,18áâà4,19áâà1,19ª1
7700000000070550025
19ª2,20ª1,20ª2,20ª3,21,21ª1áâà1,22ª1
7700000000070550026
22ª1áâà2,22ª2,22ª3,22ª3áâà2,22ª4,23
7700000000070550027
24ª1,24ª1áâà1,24ª2,24ª3,24ª3áâà3,24ª4
7700000000070550028
25ª1,25ª2,26,26áâà2,27,27áâà1,29,31
7700000000070550029
31ª2,31ª2áâà1,35ª1,35ª2,35ª3,35ª4,37ª1
7700000000070550030
37ª1áâà2,37ª1áâà4,37ª2,39ª1,39ª2,39ª3
7700000000070550031
39ª4,39ª5áâà1,41,41ª1,43ª2,43ª3
7700000000070550032
3,3áâà2,4/5,5/1áâà1,5/1áâà2,5/1áâà3
7700000000070560001
5/1áâà4,5/1áâà5,5/1áâà6,6/2áâà1
7700000000070560002
6/2áâà3,6/2áâà6,7_9áâà3,7_9áâà4
7700000000070560003
7_9áâà6,7_9áâà14,8/1áâà1,8/1áâà2
7700000000070560004
8/1áâà3,8/1áâà4,8/1áâà14,10,10/2áâà2
7700000000070560005
10/2áâà2,11_13áâà1,11_13áâà2
7700000000070560006
11_13áâà3,11_13áâà4,11_13áâà5,12áâà4
7700000000070560007
15áâà1,17áâà1,17áâà2,17áâà3,17áâà12
7700000000070560008
19_21áâà1,19_21áâà2,19_21áâà3,25
7700000000070560009
16,16áâà1,16áâà2,16áâà4,16áâà6,16áâà7
7700000000070570001
20áâà1,22áâà1,24/7áâà1,24/7áâà2,26,28
7700000000070570002
33,35,37áâà1,37áâà2,37áâà4
7700000000070570003
6,8
7700000000070570004
3,5áâà1,5áâà2,5áâà3,7ª1,7ª2,9/5
7700000000070570005
9/5áâà2,9/5áâà3,11,15/7,15,19/3,21
7700000000070570006
23áâà1,23áâà2,25,25áâà2,27,29,31
7700000000070570007
21,23,23áâà2,29áâà1,29áâà1,29áâà2
7700000000070580001
29áâà2,30áâà1,30áâà2,30áâà3,30áâà4
7700000000070580002
30áâà5,31
7700000000070580003
1áâà1,1áâà2,1áâà4,2,3áâà1,4áâà1,4áâà2
7700000000070580004
6,7áâà1,10,11áâà1,13áâà1,13áâà3,13áâà4
7700000000070580005
13áâà6,14,15/8áâà1,15/8áâà2,15/8áâà4
7700000000070580006
15/8áâà5,15/8áâà6,15/8áâà7,17/9áâà1,22
7700000000070580007
22áâà1,24
7700000000070580008
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6
7700000000070610001
2áâà9,2áâà10
7700000000070610002
1/2áâà1,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000070640001
7700000000070640002
3áâà12,3áâà15,3áâà18,3áâà21,3áâà22
7700000000070640003
3áâà24,3áâà29,5/1áâà1,5/1áâà2
7700000000070640004
2áâà1,9,14/7,16/18áâà1,16/18áâà2
7700000000070640005
16/18áâà3,16/18áâà4
7700000000070640006
7700000000070650001
2áâà1,2áâà2,2áâà3
7700000000070660001
1,1áâà1,1áâà2,1áâà1,1áâà2,1áâà4
7700000000070660002
1áâà5,1áâà6,1áâà7
7700000000070660003
2,4,4,8,8áâà1,8,10áâà1,10áâà2,10áâà3
7700000000070670001
12,14áâà1,14áâà2
7700000000070670002
1áâà1,5/10áâà1,11áâà1,11áâà2,15áâà1
7700000000070670003
7700000000070670004
6,6áâà2,6áâà3
7700000000070670005
127495
1áâà2,1áâà3,1/14áâà1,1/14áâà5,3,5/1
7700000000070680001
5/1áâà1,10,10áâà2,10áâà4,12áâà1,12áâà2
7700000000070680002
14/7áâà1,14/7áâà3,14
7700000000070680003
7áâà1,7áâà2,9áâà1,9áâà2,11áâà1,11áâà2
7700000000070680004
13áâà1,13áâà2,15áâà1,15áâà2
7700000000070680005
1,1áâà1,1áâà2,1
7700000000070700001
7,9,11,13,13_15,17
7700000000070710001
7700000000070730001
1,1áâà1,1áâà2,1áâà4,1,3,3áâà1,3,5,7
7700000000070740001
7áâà1,7ª1,7ª1áâà1,7ª1áâà2,7ª1áâà4,9
7700000000070740002
9áâà2,11,13,13áâà1,15,15_,17,17áâà2
7700000000070740003
2ª1áâà1,2ª1áâà2,2ª1áâà3,2ª1áâà4
7700000000070740004
2ª1áâà5,4áâà2,4_,4
7700000000070740005
23,23áâà2,23áâà3,23áâà4,27áâà1,31,33
7700000000070740006
10,12,14áâà4,14ª1,14ª2,14ª3,16,18ª1
7700000000070740007
18ª2,18ª3,18ª4,20,22,24,26,26áâà1,26
7700000000070740008
26,28ª1,28ª2,28ª3,30,32,32áâà1,32áâà2
7700000000070740009
7700000000070740010
104,106,108,110ª1,112áâà1,112áâà2
7700000000070750001
116,116áâà1,116,116áâà1,116áâà2
7700000000070750002
118áâà1,118áâà2,118áâà3,118áâà4
7700000000070750003
118áâà5,118áâà7,118áâà8,118áâà9
7700000000070750004
118áâà10,118áâà11,118áâà12,118áâà13
7700000000070750005
118áâà14,118áâà15,118áâà16,118áâà17
7700000000070750006
118áâà18,118áâà20,118áâà23,118áâà24
7700000000070750007
118áâà25,118áâà26,120,120áâà2,120áâà3
7700000000070750008
120áâà4,120áâà5,120áâà6,120áâà7
7700000000070750009
120áâà8,120áâà9,120áâà10,120áâà11
7700000000070750010
120áâà12,120áâà13,120áâà14,120áâà15
7700000000070750011
120áâà17,120áâà25,120áâà26,120
7700000000070750012
120áâà1,122áâà1,122áâà2,122áâà3
7700000000070750013
126áâà1,126áâà2,126áâà3,126áâà4
7700000000070750014
37,37áâà1
7700000000070750015
2,2áâà1,4,4ª1,4ª1áâà1,5,6,8,10,12,12
7700000000070750016
14,16,18,18áâà1,20,22,24,26,26áâà3,27
7700000000070750017
28,29áâà1,29áâà2,30,32,34,36,38,40,42
7700000000070750018
42áâà1,42áâà2,42áâà3,42áâà6,42áâà8
7700000000070750019
42áâà9,42áâà11,42áâà12,44,44áâà1,44
7700000000070750020
46,48/87
7700000000070750021
3,3áâà1,3áâà2,13áâà1,15áâà1,19,21,52
7700000000070750022
52áâà2,52ª1,52ª1áâà1,54,56,58,60,62,64
7700000000070750023
66,66,66,68,68,70,72,74,76,76,78
7700000000070750024
80,82,82áâà1,84,86,86áâà1,88,90,90,92
7700000000070750025
92áâà1,92áâà1,92áâà2,92áâà3,92áâà4
7700000000070750026
92áâà5,92ª1,92ª1,92ª2,92ª2,92ª3,92ª4
7700000000070750027
128,128áâà1,128áâà2,128áâà3,128áâà4
7700000000070750028
128,128áâà1,128áâà2,128áâà3
7700000000070750029
128áâà4,130áâà1,130áâà2,130áâà3
7700000000070750030
130áâà4,130áâà5,130áâà6,130áâà7,130
7700000000070750031
130áâà1,130áâà2,130áâà3,130áâà4
7700000000070750032
130áâà5,130áâà6,130áâà7,130áâà8
7700000000070750033
130áâà13,130áâà14,130áâà15
7700000000070750034
130áâà16,130áâà17,130,130áâà1,130
7700000000070750035
130áâà9,130áâà10,130áâà11,130áâà12
7700000000070750036
94,94ª1,96,96áâà1,96áâà2,96ª1,98,98ª1
7700000000070750037
98ª2,100,100áâà2,100ª1,100ª1áâà1,100ª2
7700000000070750038
100ª2áâà1,100ª3,100ª4
7700000000070750039
7700000000070760001
7700000000070760002
7700000000070760003
7700000000070760004
1áâà23,1áâà24,1áâà25,1áâà28,1áâà37
7700000000070760005
1áâà41,1áâà43,1áâà44,1áâà45,1áâà46
7700000000070760006
7700000000070760007
7700000000070760008
1áâà57,1áâà58,1ª1,1ª2,1ª3,1ª4,1ª5,1ª6
7700000000070760009
1ª7,1ª8,1ª9,1ª10,1ª11,1ª12,1ª13,1ª14
7700000000070760010
1ª15,1ª16,1ª17,1ª18,1ª19,1ª20,1ª21
7700000000070760011
1ª22,1ª23,1ª24,1ª25,1ª26,1ª27,1ª28
7700000000070760012
1ª29,1ª30,1ª31,1ª32,1ª33,1ª34,1ª35
7700000000070760013
1ª36,1ª37,1ª38,1ª39,1ª40,1ª41,1ª42
7700000000070760014
1ª43,1ª44,1ª45,1ª46,1ª47,1ª48,1ª49
7700000000070760015
1ª50,1ª51,1ª52,1ª53,1ª54,2,2áâà1,3,3
7700000000070760016
4,6,7,7,7áâà1,7áâà2,7áâà3,7áâà4
7700000000070760017
7áâà5,8,9,10,11,12,12áâà4,13,14,15,16
7700000000070760018
26áâà3,27áâà1,27áâà2,27áâà3,27áâà7,28
7700000000070760019
17,18,19,19áâà2,20,21,22,23,24,25,26
7700000000070760020
1,2,3,4,5,6,7,8,9,10,11,12,13,14,15
7700000000070770001
15áâà4,16,16áâà1,17,19,21,23,25,27,29
7700000000070770002
7700000000070770003
1,1áâà2,2,3,4,5,6,7,8,9,10,11,12,13,14
7700000000070780001
15áâà1,16,17,18
7700000000070780002
1,2,2áâà1,3,3áâà4,4,5,6,7,7áâà1,8,9,10
7700000000070790001
11,12,13áâà1,13áâà2,13áâà3,15,15áâà4,17
7700000000070790002
1,1áâà2,1áâà3,1ª1,1ª2,1ª3,1ª3áâà1
7700000000070810001
1ª3áâà2,1,1áâà1,1áâà2,1áâà3,1áâà4
7700000000070810002
2,3,3áâà1,3,3áâà1,3,4,5,5áâà1,5áâà2
7700000000070810003
6,7,7áâà1,8,9,10,11,11áâà1,11ª1,12,13
7700000000070810004
13áâà2,14,15,15ª3,16,17,17áâà1,18,19
7700000000070810005
20,21,23ª1,23ª1áâà1,23ª1áâà2,23ª2
7700000000070810006
23ª2áâà1,23ª3,25,25ª1,25ª2,25ª2áâà1
7700000000070810007
25ª2áâà2,25ª3,25ª3áâà1,132áâà1
7700000000070810008
132áâà2,132áâà6
7700000000070810009
1,3,3,4,4,4,5,5,6,6áâà1,6ª1
7700000000070830001
6ª1áâà1,8,8ª1,10,10ª1,13ª1,13ª1áâà1,13ª2
7700000000070830002
3,9,11,11,12,14,14áâà1,14ª1,15ª1
7700000000070830003
15ª1,15ª1,15ª2,15ª2áâà2,16áâà4
7700000000070830004
16áâà5,16ª1,16ª3,16ª4,16ª5,17ª1,17ª2
7700000000070830005
17,18ª1,18ª2,18ª3,18ª4,18ª5,18ª6
7700000000070830006
19áâà2,19ª1,19ª2,19ª2,20,21ª1,21ª2
7700000000070830007
22,23,24,25,25,26,26,27ª1,27ª1
7700000000070830008
27ª1,27ª2,27ª3,27ª3,29ª1,30,30áâà1
7700000000070830009
31ª1,31ª2,31ª3,32,33,33,34ª1,34ª2
7700000000070830010
4,6,6áâà3,8áâà1,8áâà2,10áâà1,10áâà2
7700000000070840001
10áâà3,10áâà4,10áâà6,10áâà7,10áâà8
7700000000070840002
10áâà9,16ª4
7700000000070840003
2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,2áâà6,5
7700000000070910001
9,11,13,13áâà1,15áâà1,15áâà2,15áâà3
7700000000070910002
15áâà4
7700000000070910003
1,1áâà1,1/2áâà2,1/2áâà3,1/2áâà4
7700000000070930001
1/2áâà5,3,8,16áâà1,16áâà2,18,22áâà1
7700000000070930002
22áâà2,22áâà3,24
7700000000070930003
2áâà2,3,3,5,6
7700000000070940001
2/12áâà6,2/22áâà2,2/22áâà4,2/22áâà6
7700000000070950001
2/22áâà7,3,5áâà1,5áâà2,5áâà3,5áâà4,7
7700000000070950002
7áâà1,7áâà3,7,8áâà1,8áâà2,8áâà3,8áâà4
7700000000070950003
8ª2,10áâà1,10áâà2,10áâà3,12áâà1,14
7700000000070950004
14áâà1,14áâà2,14áâà3,14áâà5
7700000000070950005
14áâà6,14áâà7,16,19/2,21áâà1,21áâà2
7700000000070950006
21áâà3,21áâà4,21áâà11,23áâà1,23áâà2
7700000000070950007
23áâà3,23áâà4,23áâà5,23áâà6,23áâà7
7700000000070950008
23áâà8,23áâà9,23áâà11,23áâà12,23áâà13
7700000000070950009
23áâà17,23áâà18,23áâà19,23áâà20,23áâà21
7700000000070950010
7700000000070960001
1,1áâà1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5
7700000000071000001
7700000000071000002
7700000000071000003
7700000000071000004
7700000000071000005
2áâà27,2áâà28,3áâà1,3áâà2,5áâà1
7700000000071000006
7700000000071000007
7700000000071000008
6áâà11,6áâà12,12áâà1,12áâà2,12áâà3
7700000000071000009
7700000000071000010
13áâà1,13áâà2,13áâà4,13áâà5,13áâà6
7700000000071000011
7700000000071000012
13áâà16,13áâà19,13áâà20,15áâà1
7700000000071000013
7700000000071030001
3,3áâà2,3ª1,3ª2,3ª3,3ª4,5,5áâà2,5áâà3
7700000000071040001
5ª1,5ª2,7,7ª1,7ª2
7700000000071040002
11ª1,11ª3,13,13ª1,15,17,17,19,19,19
7700000000071040003
14/15,16ª1,16ª1áâà2,16ª2,18,20,26,26
7700000000071040004
28,28,30,32,34,34,36ª1,36ª2,36,38
7700000000071040005
2,2áâà2,4,4ª1,10ª1,10ª2,12/12ª1
7700000000071040006
12/12ª2,12/12ª2áâà2
7700000000071040007
7700000000071050001
7700000000071050002
1áâà13,1,1áâà2,1áâà4,1áâà5,1áâà7
7700000000071050003
1áâà8,2/3,2/3áâà2,2/3áâà3,2/3áâà4
7700000000071050004
2/3áâà5,2/3áâà9,4/12,5/14,6,7,8,8ª1,9
7700000000071050005
10/12,10/12áâà1,11,11ª1,11ª2áâà1,12
7700000000071050006
12áâà2,13,14,14,14áâà2,15,15áâà1
7700000000071050007
15áâà2,15áâà3,16,16áâà2,16áâà3,17,17ª1
7700000000071050008
17,17áâà1,18ª1,18ª1áâà2,18ª1áâà3
7700000000071050009
18ª2,19,19áâà1,19ª2áâà1,20ª1,20ª2,21
7700000000071050010
21áâà2,22,22áâà2,23,24áâà2,24,25,25ª2
7700000000071050011
26,27,27áâà1,27áâà2,28,30,30áâà3
7700000000071050012
30áâà5,30ª1,30ª1áâà4,30ª2,32ª1,32ª2
7700000000071050013
33áâà1,33áâà2,33áâà3,33áâà4,33áâà6
7700000000071050014
7700000000071050015
33áâà12,33áâà13,33áâà14,33áâà15
7700000000071050016
33áâà16,33áâà16,33áâà18,33,33áâà1
7700000000071050017
33áâà2,34ª1,34ª2,34ª2áâà1,36,36áâà2
7700000000071050018
36áâà3,38/25,38áâà1,38áâà2
7700000000071050019
39,39áâà12,39áâà13,41,42,44áâà1,44áâà2
7700000000071050020
44áâà12,44áâà13,45,47,48,48áâà7,49
7700000000071050021
51áâà1,51áâà2,51áâà3,52,53,54,55
7700000000071050022
56áâà1,56áâà2,56áâà3,58
7700000000071050023
1,1áâà2,1ª1,1ª2,1ª3,1ª3áâà1,1ª4,1ª5,2
7700000000071060001
3,3ª1,4ª1,4ª2,4ª3,4ª32,4,5,6,7,8,8ª1
7700000000071060002
8ª2,9,9,10,10ª1,10ª1áâà2,11,12,12áâà2
7700000000071060003
12áâà3,12ª1,13,14,14ª1,15,15,16,16ª1
7700000000071060004
16ª1áâà1,16ª2,17,18,19,20,20ª1,20ª2,21
7700000000071060005
21,22,22,23,23áâà1,23áâà2,24,24_,25
7700000000071060006
7700000000071060007
1/9,1/9áâà2,3/14,4,5,6áâà1,6áâà2,6áâà3
7700000000071080001
7áâà1,8áâà1,8áâà2,8áâà3,9/14,10,10áâà1
7700000000071080002
10áâà4,12/1áâà1,12/1áâà3,14/2,16áâà1
7700000000071080003
17,18,19áâà1,19áâà2,20,21áâà1,21áâà2
7700000000071080004
22/1,23,24,25,25áâà1,26/1,27ª1,27ª2
7700000000071080005
27ª3,28,30áâà1,30áâà2,30áâà3,32áâà1
7700000000071080006
32/2,36,36áâà2,37/7áâà1,37/7áâà2
7700000000071080007
37/7áâà3,38áâà1,38áâà2,40/1,41,42/2
7700000000071080008
46áâà2,46áâà3,46áâà4,47,48/2áâà5
7700000000071080009
49áâà1,49áâà2,51áâà1,51áâà2,51áâà3
7700000000071080010
51áâà4,53/2áâà1,53/2áâà2,53/2áâà3
7700000000071080011
53/2áâà4,53/2áâà10,53
7700000000071080012
1áâà1,1áâà2,1áâà4,1áâà5,1áâà6,1áâà10
7700000000071100001
7700000000071100002
1áâà16,1áâà17,1áâà19,1áâà21,1áâà22
7700000000071100003
1áâà23,1áâà24,1áâà25,1áâà26,1áâà28
7700000000071100004
1áâà30,1áâà31,1áâà32,1áâà34,1áâà35
7700000000071100005
1áâà36,1áâà37,2,2áâà10,4,4áâà2,6,6áâà2
7700000000071100006
6áâà2,8,10
7700000000071100007
29áâà2,29áâà16,31,33áâà1,35,36áâà1
7700000000071110001
37áâà1,37áâà2,41áâà1,41áâà2,41áâà3
7700000000071110002
41áâà4,43,43áâà1,43áâà2,43áâà3
7700000000071110003
43áâà4,44áâà2,44áâà3,45,46áâà14
7700000000071110004
46/17áâà1,46/17áâà8,47áâà2,47áâà3
7700000000071110005
48áâà1,48áâà2,49,50áâà1,50/8áâà2
7700000000071110006
50/8áâà3,50/5,51áâà1,51áâà2,51áâà3
7700000000071110007
52áâà1,52áâà2,54áâà1,54áâà2,54áâà3
7700000000071110008
54áâà4,56áâà1,56áâà2,56áâà3,56áâà4
7700000000071110009
57/46áâà1,58,60áâà1,60áâà2,60áâà3
7700000000071110010
60áâà9,62áâà3
7700000000071110011
3áâà1,3áâà2,5,5/7áâà2,7áâà1,7áâà2
7700000000071110012
7áâà5,9/15áâà1,11/4áâà1,11/4áâà2
7700000000071110013
11/4áâà3,12áâà1,12áâà2,12áâà3,13
7700000000071110014
14/2áâà7,14/2áâà11,15áâà1,15áâà2,16
7700000000071110015
16áâà2,16áâà8,16/1áâà1,16/1áâà8,17áâà1
7700000000071110016
17áâà2,18,19/13áâà1,19/16áâà1
7700000000071110017
19/16áâà2,20/1áâà1,21/18áâà1,21/18áâà4
7700000000071110018
22/2,24áâà3,24/1áâà1,24/1áâà2,24/1áâà5
7700000000071110019
24/1áâà6,24/1áâà7,26/2áâà3
7700000000071110020
2,8,10
7700000000071110021
7700000000071120001
3_5áâà1,3_5áâà2,4áâà1,4áâà2,6,6áâà1,8
7700000000071120002
8_8áâà6,9,10,11áâà1,11áâà3,11áâà4,12
7700000000071120003
12áâà2,13áâà1,13áâà2,14áâà1,14áâà2,15
7700000000071120004
15áâà4,16áâà1,16áâà2,16áâà3,17áâà1
7700000000071120005
7700000000071120006
7700000000071120007
17áâà12,18,18áâà2,18áâà5,19,19áâà2
7700000000071120008
19áâà3,19áâà4,19,20áâà1,20áâà2,21
7700000000071120009
21áâà3,21áâà8,22áâà3,22/2,24/1
7700000000071120010
25/20áâà1,26,27/24,28/2áâà1,28/2áâà2
7700000000071120011
30/1,34áâà1,34áâà2,36áâà1,36áâà2,38
7700000000071120012
2áâà1,2áâà2,3,3ª1,5,5áâà1,5áâà7,5áâà8
7700000000071130001
5áâà9,5áâà10,5áâà11,5áâà12,5ª1
7700000000071130002
5_5áâà3,5áâà1,5áâà3,7áâà1,7áâà2
7700000000071130003
7700000000071150001
2/1áâà7,2/1áâà8
7700000000071150002
1,1áâà2,1áâà3,1áâà6,1_3áâà1,2/1áâà1
7700000000071150003
2/1áâà2,3,3áâà2,3áâà3,3áâà4,4,4áâà2
7700000000071150004
7700000000071150005
3áâà1,3áâà3,4,5,6,6áâà1,6áâà2,8,8áâà3
7700000000071170001
8áâà4,8áâà9,10,13,15,19,21
7700000000071170002
6/3áâà1,8/2áâà1,8/2áâà2,10áâà1,12áâà1
7700000000071190001
14/2áâà1,14/2áâà2,14/2áâà4,14/2áâà5,16
7700000000071190002
18áâà1,18áâà2,20,20áâà2,22áâà1,22áâà3
7700000000071190005
24/7áâà1,24/7áâà2,24/7áâà3,24/7áâà5
7700000000071190006
24/7áâà8,26áâà1,26áâà2,26áâà3
7700000000071190007
26áâà4,26áâà5,26áâà6,26áâà7
7700000000071190008
26áâà8,26áâà9,26áâà10,26áâà11
7700000000071190009
26áâà12,26áâà13,26áâà14,26áâà15
7700000000071190010
26áâà16,26áâà17,26áâà18,26áâà1
7700000000071190011
30áâà3,32áâà1,32áâà2,34,34áâà2,36áâà1
7700000000071190012
36áâà2,38áâà1,38áâà4,40áâà1,40áâà4
7700000000071190013
40áâà5,40áâà10,40áâà16,40áâà18,40
7700000000071190014
40áâà2,42áâà1,42áâà2,42áâà3,42áâà5
7700000000071190015
44áâà1,44áâà2,44áâà3,44/1áâà4,46áâà1
7700000000071190016
46áâà3,46áâà7,46áâà8
7700000000071190017
3,5/12,7áâà1,7áâà2,7áâà4,7áâà5,7áâà6
7700000000071190018
7700000000071190019
7700000000071190020
13áâà5,13áâà6,13áâà10,13áâà11,13áâà13
7700000000071190021
13áâà15,13áâà16,13áâà18,13áâà20
7700000000071190022
13áâà24,15,17áâà1,17áâà2,17áâà3,17áâà6
7700000000071190023
19,21áâà1,21áâà2,21áâà5,21áâà6,21áâà8
7700000000071190024
35,35áâà2,35,37áâà1,37áâà2,37áâà3
7700000000071190025
41áâà1,41áâà3,41áâà5,41áâà6,41áâà7,47
7700000000071190026
7700000000071190003
7700000000071190004
43áâà1,43áâà2,43áâà3,43áâà4,45áâà1
7700000000071190027
47áâà2
7700000000071190029
39áâà1
7700000000071190030
107450
3,3/6,5,8,9/12,10,12áâà1
7700000000071200001
2/1áâà1,2/1áâà2,4áâà1,4áâà2,6/2áâà5
7700000000071210001
8/1,10,10áâà2,10,12áâà1,12áâà2,12áâà7
7700000000071210002
12áâà12,13áâà1,13áâà2,13áâà3,13áâà4
7700000000071210003
14áâà1,14áâà2,15,16/5,16/5áâà5,18áâà1
7700000000071210004
18áâà2,18áâà3,19áâà1,19áâà2,20áâà1
7700000000071210005
20áâà2,24áâà1,24áâà2,24áâà4,24áâà5
7700000000071210006
24áâà6,24áâà7,24áâà14,25,27áâà1,27áâà2
7700000000071210007
27áâà4,28/1áâà1,28/1áâà2,28/1áâà3,29
7700000000071210008
29áâà1,31áâà1,31áâà2,33
7700000000071210009
1/11,3áâà1,3áâà3,3áâà3,5áâà1,6áâà1
7700000000071220001
6áâà1,6áâà1,6áâà2,6áâà3,7áâà1,7áâà2
7700000000071220002
8áâà1,8áâà2,10áâà1,10áâà3,10áâà7
7700000000071220003
2/8áâà5,2/8áâà6,3/1áâà1,3/1áâà2
7700000000071230001
3/1áâà3,3/1áâà4,3/1áâà5,3áâà1,3áâà2
7700000000071230002
3áâà3,3áâà4,4,4áâà10
7700000000071230003
2/1áâà2,2/1áâà3,3,4_6áâà1,5,5áâà1
7700000000071240001
7700000000071240002
7700000000071240003
7700000000071240004
5áâà11,5áâà12,5áâà13,5áâà14
7700000000071240005
5áâà16,5áâà17,5áâà20,5,5áâà2,8,10
7700000000071240006
12áâà1,12áâà2,14,14áâà1,16
7700000000071240007
3áâà1,3áâà2,5/13áâà1
7700000000071250001
1/12,1/12áâà4,1/12áâà5,1/12áâà11,3áâà2
7700000000071260001
3_5áâà1,7áâà1,9áâà2,9áâà3,9áâà4,9áâà5
7700000000071260002
4,6áâà1
7700000000071260005
9áâà7,9áâà11
7700000000071260003
13áâà,13áâà1,15,17,17áâà2,17áâà3
7700000000071260006
29,29,29áâà2,30/6áâà1,31áâà1,33áâà1
7700000000071270001
34,35áâà1,35áâà2,35áâà3,36,37áâà1
7700000000071270002
37áâà2,37áâà3,38áâà1,38áâà2,39áâà1
7700000000071270003
39áâà2,40,42áâà2,44,50,50áâà1,50/72áâà2
7700000000071270004
3,5áâà3,5áâà7,5/6áâà1,5/6áâà4,5/6áâà5
7700000000071270005
6áâà3,7,9/12áâà1,9/12áâà2,9/12áâà3
7700000000071270006
9/12áâà6,11,13áâà1,13áâà1,13áâà3
7700000000071270007
13áâà6,14áâà1,15,17,18áâà1,18áâà2
7700000000071270008
19áâà,19áâà1,19áâà2,19áâà4,19áâà5
7700000000071270009
19áâà6,19áâà13,20áâà1,20áâà2,22áâà1
7700000000071270010
22áâà2,23áâà1,23áâà2,23áâà8,23áâà9
7700000000071270011
23áâà11,24,26áâà1
7700000000071270012
3,4áâà1,4áâà2,4áâà3,5/12áâà1,5,6áâà1
7700000000071290001
6áâà2,6áâà4,7,7,8,9,10,11,13,15
7700000000071290002
15áâà2,15áâà3,15áâà4
7700000000071290003
2/26áâà1,2/26áâà2,2áâà1,2áâà2,4áâà1
7700000000071300001
4áâà2,5áâà1,6áâà1,6áâà2,7áâà1,7áâà1
7700000000071300002
7áâà1,7áâà1,7áâà2,7áâà3,8áâà1,8áâà2
7700000000071300003
8áâà3,9áâà1,9áâà2,9áâà3,9áâà4,9áâà5
7700000000071300004
10áâà1,10áâà2,10áâà2,10áâà3,11,12,14
7700000000071300005
15,15áâà2,15áâà3,15áâà4,16áâà1,16áâà2
7700000000071300006
19/2áâà1,21/1áâà1
7700000000071300007
18/17áâà2,18/17áâà5
7700000000071300008
20áâà1,22,23,23/8áâà3,24,25,26
7700000000071300009
1áâà1,1/2áâà1,2,2áâà1,2áâà2,2áâà3,4
7700000000071310001
4áâà3,5áâà1,6,6áâà2,7áâà1,7áâà5,8
7700000000071310002
8áâà2,9áâà1,9áâà5,9áâà10,9ª1,10áâà3
7700000000071310003
10ª1,10ª2,11áâà1,11ª1,12ª1,12ª2,13áâà1
7700000000071310004
13áâà4,13áâà6,13ª1,15_17áâà1,15_17áâà2
7700000000071310005
15_17áâà3,15_17áâà4,15_17áâà5
7700000000071310006
15_17áâà6,15_17áâà7,15_17áâà8
7700000000071310007
15_17áâà9,15_17áâà10,15_17áâà11
7700000000071310008
15_17áâà12,15_17áâà13,15_17áâà14
7700000000071310009
15_17áâà15,15_17áâà16,15_17áâà17
7700000000071310010
15_17áâà18,15_17áâà19,15_17áâà20
7700000000071310011
15_17áâà22,15_17áâà23,15_17áâà23
7700000000071310012
15_17áâà24,15_17áâà25,15_17áâà26
7700000000071310013
15_17áâà27,15_17áâà28,15_17áâà33
7700000000071310014
19áâà3,19áâà4,19ª4,21,21áâà5,21ª1,23ª1
7700000000071310015
23_25áâà1,27áâà1,27áâà2,29_31áâà1
7700000000071310016
29_31áâà3,29_31áâà4
7700000000071310017
8/13áâà1,8/13áâà2,8/13áâà4,10áâà1
7700000000071320001
10áâà2,10áâà4,12/2áâà3,12/2áâà4,14,19
7700000000071320002
19áâà1,19áâà2,19áâà3,19áâà5,19áâà6
7700000000071320003
19áâà7,19áâà8,19áâà9,19áâà10
7700000000071320004
1,3,5,7áâà1,7áâà2,7áâà3,9/12áâà1
7700000000071320005
9/12áâà2,13áâà1,13áâà3,13áâà4,15
7700000000071320006
1,3,6,8,8áâà2,8áâà3,8áâà4,8áâà5,8áâà6
7700000000071330001
7700000000071330002
8áâà13,8áâà14,8áâà15,8áâà1,10,11,11
7700000000071330003
11
7700000000071330004
15,15áâà1,15áâà3,17/13,19ª1,19ª2,19ª3
7700000000071340001
19ª3áâà1,21,23ª1,23ª2,23ª3,25,27
7700000000071340002
27áâà1,28áâà1,29/25
7700000000071340003
1,3,3áâà1,3áâà3,5,7/50
7700000000071340004
2,2áâà1,2áâà2,4,4áâà2,4ª1,4,6ª1,6ª2
7700000000071340005
6ª2áâà1,8,8áâà1,8áâà2,8,9,10/30,11/28
7700000000071340006
12,12/23,12/23áâà2,12/23áâà3,14ª1,14ª2
7700000000071340007
14ª2áâà2,14áâà1,16,18ª1,18ª2,18
7700000000071340008
18áâà1,20,20áâà1,22ª1,22ª1áâà1,22ª2
7700000000071340009
22ª3,22ª3áâà1,24
7700000000071340010
7700000000071350001
3áâà1,3áâà2,4áâà2,4áâà4,4áâà1,5áâà1
7700000000071350002
5áâà3,5áâà6
7700000000071350003
7700000000071350004
3/5,3/5áâà1,3/5áâà2,3/5áâà4,3/5áâà5
7700000000071360001
3/5áâà6,3/5áâà7,3/5áâà9,3/5áâà10
7700000000071360002
7/10áâà2,7/10áâà3,7/10áâà5,8áâà1,8áâà9
7700000000071360003
9,10,10áâà2,10áâà3,10áâà4,11/11áâà1
7700000000071360004
11/11áâà2,11/11áâà3,11/11áâà4,12
7700000000071360005
2,3áâà5,4áâà2,4/6áâà5,8/2áâà1,8/2áâà2
7700000000071370001
8/2áâà7,8/2áâà8
7700000000071370002
3,3áâà4,3áâà6,3áâà10
7700000000071370003
7700000000071380001
1/11,3,4áâà1,4áâà2,4áâà3,6áâà1,6áâà3
7700000000071390001
6áâà4,7áâà1,7áâà2,8/1áâà1,8/1áâà2,8
7700000000071390002
8áâà2,10áâà1,10áâà2,10áâà4,11,11áâà1
7700000000071390003
12,12áâà1,15áâà1,15áâà2,15áâà3,17,19
7700000000071390004
7700000000071390005
7700000000071410001
1,2,3,3ª1,4,5,6,7,7áâà1,8,9,10,11,12
7700000000071430001
13,14,15,16,18,18
7700000000071430002
1,2/11,4,4áâà2,4,6,8,9,10ª1,10ª2,12
7700000000071440001
14ª1,14ª2,14ª3,14ª4,16,18áâà2,18áâà5
7700000000071440002
18ª1,18ª2,20ª1,20ª2
7700000000071440003
4/19áâà1,4/19áâà2
7700000000071470001
2,3áâà1,3áâà2,3áâà3,3áâà5,4áâà1,4áâà2
7700000000071480001
6,6áâà2,8áâà1
7700000000071480002
8,8,8áâà1
7700000000071490001
5,5áâà1,5,7,9,11,11áâà1,13,13,15
7700000000071490002
15áâà1,15
7700000000071490003
1,1áâà1,1áâà2,1ª1,1ª2,1,2,3,3ª1áâà1,4
7700000000071500001
4ª1,5,6,6ª1,6ª2,7,7áâà1,8,8áâà1,10
7700000000071500002
10áâà1,12,12ª1
7700000000071500003
1,2,2áâà1,3,4,5,6,7,8,9,10,11,12,13,14
7700000000071510001
15,16,17,18,19,21,23,25,27,29
7700000000071510002
31,31áâà1,31áâà2,31,31,33,33,35,39
7700000000071520001
39,41,41ª1,41ª2,43,43ª1,43,45,45ª1
7700000000071520002
45,45,49,49ª1,49ª2,49,49,51,52
7700000000071520003
52áâà1,52ª1,52ª2,54,56ª1,56ª1áâà2,56/2
7700000000071520005
88áâà1,88áâà2
7700000000071520006
24,24áâà2,26ª1,26ª2,28,30,32,34,34áâà2
7700000000071520007
36,38,40,42,44,50,50áâà2,50áâà4
7700000000071520008
58
7700000000071520004
55,57,57,57,58,58,59,59,59,61
7700000000071520009
61áâà1,62ª1,62ª2,62ª3,62ª4,62,62
7700000000071520010
65áâà1,65áâà2,68/35
7700000000071520011
72,72áâà1,73áâà1,73áâà2,73áâà3,73áâà4
7700000000071520012
73áâà5,73áâà6,73áâà10,73áâà11,74
7700000000071520013
74áâà1,74áâà2,88,90
7700000000071520014
áâà1,áâà2,áâà3,1áâà1,1áâà2,1áâà3,1áâà4
7700000000071520015
1áâà5,1áâà6,1áâà7,1áâà8,1áâà9,1,2
7700000000071520016
3áâà1,4,4áâà2,5,6,6áâà2,7áâà1,7áâà2
7700000000071520017
7áâà3,7áâà4,7áâà5,7áâà6,7áâà9,7áâà10
7700000000071520018
7áâà11,8áâà1,8áâà2,8,9áâà1,9áâà2
7700000000071520019
9áâà3,9áâà5,9áâà7,10,11áâà1,11áâà2
7700000000071520020
7700000000071520021
11áâà8,11áâà9,11áâà10,11áâà11,11áâà14
7700000000071520022
7700000000071520023
11áâà19,11áâà23,11áâà24,11áâà25
7700000000071520024
11áâà26,11áâà27,11áâà28,12,14,16,17
7700000000071520025
7700000000071520026
19áâà7,19áâà8,19áâà11,19áâà1,20
7700000000071520027
21áâà1,21áâà2,21áâà3,21áâà4,21áâà1
7700000000071520028
21áâà2,21áâà1,23áâà1,23áâà2,23áâà3
7700000000071520029
7700000000071520030
1áâà1,1áâà12,2,2áâà1,2áâà2,2áâà5
7700000000071530001
2áâà13,2áâà14,2áâà15,2áâà16
7700000000071530002
2áâà17,2áâà18,3áâà1,3áâà2,4áâà1
7700000000071530003
4áâà2,4áâà3,6,6_,6,7,8,9áâà1,9áâà2
7700000000071530004
11,13,14,15,16,17,18,19,20,21,21_21
7700000000071530005
21,22áâà1,22áâà2,22áâà4,23,23,23
7700000000071530006
7700000000071540001
4_6,7áâà1,7áâà2,7áâà3,7áâà5
7700000000071550001
3,4áâà1,4áâà2,5áâà1,5áâà2,5áâà3,5áâà4
7700000000071560001
5áâà5,5áâà6,5áâà7,5áâà8,5,5áâà1
7700000000071560002
5áâà2,5áâà3,6áâà1,6áâà2,7áâà1,7áâà2
7700000000071560003
8áâà1,8áâà2,9,9áâà2,10
7700000000071560004
1áâà4,1/2áâà1,1/2áâà2,1/2áâà2,4áâà1
7700000000071580001
4áâà2,4áâà3,4áâà4,4áâà5,6
7700000000071580002
7700000000071590001
4áâà1,4áâà3,6,9áâà1,9áâà1,9áâà2
7700000000071590002
2áâà1,2áâà17,2/6áâà1,2/6áâà2,2/6áâà3
7700000000071600001
2/6áâà4,2/6áâà5,2/6áâà6,2/6áâà7
7700000000071600002
2/6áâà8,2/6áâà9,2/6áâà10,2/6áâà13
7700000000071600003
2/6áâà14,3áâà1,3áâà2,3áâà3,3áâà4,3áâà6
7700000000071600004
3áâà7,3áâà8,4,4áâà2,5,7
7700000000071600005
3áâà2,5áâà1,5_7áâà3,6áâà1,6áâà3,7áâà1
7700000000071610001
7áâà2,8,8,8áâà2,8áâà3,8áâà4,8áâà5
7700000000071610002
9áâà1,9áâà2,9áâà3,10áâà1,10áâà2
7700000000071610003
11_13áâà1,11_13áâà2,11_13áâà4,14áâà1
7700000000071610004
7700000000071610005
2,2áâà2,4,4áâà2,4áâà3,4áâà4,4áâà5
7700000000071620001
4áâà6,4áâà7,5,6,6áâà2,7,9,9áâà3,11
7700000000071620002
11áâà3,11ª2,15áâà1,15áâà6,17áâà1,17ª1
7700000000071620003
19áâà1,19áâà7,19áâà8,19ª1,21,21áâà1
7700000000071620004
21áâà3,21áâà4,21áâà6,21áâà7,21áâà8
7700000000071620005
21áâà9,21áâà11,21áâà12,21áâà13,21ª1
7700000000071620006
21ª3,23áâà1,23áâà1,23áâà2,25,25áâà1
7700000000071620007
7700000000071620008
25áâà7,25áâà8,27áâà1,29,29áâà2,30
7700000000071620009
30áâà3,31áâà3,31áâà7,31áâà32,32,33áâà1
7700000000071620010
33áâà2,33áâà3,33áâà4,33áâà6,33áâà8
7700000000071620011
33áâà13,34áâà1,34áâà2,34áâà4,35,36áâà1
7700000000071620012
36áâà3,36áâà11,36áâà11,36áâà11,36ª2
7700000000071620013
37áâà2,38áâà1,38áâà2,38áâà5,39/6,40
7700000000071620014
2áâà2,2áâà3,2áâà4,3áâà1,3áâà2,3áâà3
7700000000071630001
7700000000071630002
26/1áâà1,26/1áâà1,26/1áâà2,26/1áâà4
7700000000071640001
30áâà1,30áâà2,30áâà3,30áâà5,30áâà6
7700000000071640002
30áâà7,30áâà8,30áâà10,32áâà1,32áâà13
7700000000071640003
32áâà14,34áâà1,34áâà2,34áâà3,34áâà4
7700000000071640004
34áâà5,34áâà6,34áâà8,36/10áâà1
7700000000071640005
4áâà1,6áâà1,8áâà1,8áâà3,10áâà4,10áâà5
7700000000071640006
10áâà6,14áâà1,14áâà2,14áâà3,14áâà4
7700000000071640007
7700000000071640008
14áâà10,16áâà1,18/8áâà1,18/8áâà3
7700000000071640009
18/8áâà5,20áâà1,20áâà2,20áâà3,22áâà1
7700000000071640010
22áâà2,24/2áâà1,24/2áâà2,24/2áâà5
7700000000071640011
3,5,5áâà1,5,6/1áâà1,7,7áâà7,7,7áâà4
7700000000071660001
7áâà5,8áâà1,8áâà2,9áâà1,9,10áâà1
7700000000071660002
10áâà2,12,14áâà1,14áâà2,16,18,20,22/4
7700000000071660003
7700000000071670001
103426
8áâà1,8áâà2,8áâà3,8áâà5,8áâà6,8áâà7
7700000000071670002
8/1áâà5,10áâà4,10áâà5,12/1áâà1
7700000000071670003
12/1áâà3,14,16áâà2,16ª1,18,18áâà2
7700000000071670004
20áâà1,20áâà2,20áâà3,22áâà1,22áâà2
7700000000071670005
24áâà1,24áâà1,24áâà3,28,32áâà1,32áâà2
7700000000071670006
32áâà4,32áâà9,34áâà2,34áâà3,34áâà4
7700000000071670007
2,4/2,4/2áâà1,6,6áâà1,6áâà5
7700000000071670008
1,5/6áâà1,5/6áâà2,5/6áâà3,5/6áâà4
7700000000071670009
5/6áâà5,5/6áâà7,5/6áâà8,5/6áâà9,5
7700000000071670010
7/5áâà1,7/5áâà2,7/5áâà3,7/5áâà4
7700000000071670011
7/5áâà5,7/5áâà7,9áâà1,9áâà2,9áâà3
7700000000071670012
7700000000071670013
11áâà1,11áâà2,11áâà3,11áâà7,11áâà8,13
7700000000071670014
15,15áâà1,15áâà2,15áâà3,15áâà4,15
7700000000071670015
17,17,21/7,21/7áâà2,23áâà1
7700000000071670016
3áâà1,3áâà2,4,5áâà1,6/3áâà1,6/3áâà3,7
7700000000071680001
8/5áâà1,8/5áâà2,8/5áâà3,8/5áâà4
7700000000071680004
8/5áâà5,9áâà1,9áâà2,9áâà3,9áâà4,9áâà6
7700000000071680005
9áâà7,10,11áâà1,11áâà2,11áâà3,12áâà1
7700000000071680006
12áâà3,15,16/4,17/18áâà4,18,18áâà2
7700000000071680007
7700000000071680008
7700000000071680002
7700000000071680003
23,28/60áâà1,29áâà1,29áâà2,29áâà3
7700000000071690001
29áâà4,31,31áâà2,32áâà1,32áâà2,32áâà3
7700000000071690003
33áâà1,33áâà2,33áâà3,33áâà4,34áâà3
7700000000071690004
34ª2,36áâà1,38áâà1,38áâà2,39/43ª1
7700000000071690005
39/43ª2,40áâà1,40áâà2,40/22áâà4,42
7700000000071690006
43ª3,43ª4,44ª1,44/18,45áâà1,45áâà2
7700000000071690007
45áâà3,46áâà1,46áâà2,47,48áâà1,48áâà2
7700000000071690008
48áâà3,49áâà1,49áâà2,49áâà3,49áâà4
7700000000071690009
49áâà5,49áâà7,49áâà8,50áâà1,51áâà1
7700000000071690010
51áâà2,51áâà3,51áâà4,51áâà5,52áâà1
7700000000071690011
52áâà2,52áâà3,52áâà4,52_52áâà2,53áâà1
7700000000071690012
53áâà2,53áâà3,54áâà1,54áâà2,54/23áâà1
7700000000071690013
55,55áâà2,57áâà1,57áâà7,57áâà8,58,59,62
7700000000071690014
7700000000071690002
109189
4,6,7/8,8áâà1,8áâà2,9,9áâà2,10_12áâà1
7700000000071690015
10_12áâà4,10_12áâà7,10_12áâà8
7700000000071690016
10_12áâà10,10_12áâà11,10_12áâà12
7700000000071690017
11áâà1,11áâà2,13áâà1,13áâà2,13áâà17
7700000000071690018
13/14áâà4,13/14áâà6,13/14áâà7
7700000000071690019
13/14áâà8,13/14áâà14,13/14áâà15,14áâà1
7700000000071690020
19áâà5,19áâà6,20áâà1,20áâà2,21/7áâà3
7700000000071690021
16/2áâà6,16/2áâà7,16/2áâà20,18áâà2
7700000000071690022
15,15áâà2,16/2áâà3,16/2áâà4,16/2áâà5
7700000000071690023
18/1áâà1,18/1áâà2,19áâà1,19áâà3,19áâà4
7700000000071690024
22áâà1,24áâà1,26áâà1,26áâà1,26áâà3
7700000000071690025
2,2áâà1,2áâà2,2ª1,2ª1áâà2,2ª1áâà3
7700000000071700001
2ª1áâà4,2ª2áâà14,4ª1,4ª2,4ª3,4,5ª2
7700000000071700002
5ª2áâà1,5,5áâà2,7,7,8,9,9áâà1
7700000000071700003
9áâà3,9ª1,9ª2,9ª3,9ª3áâà,9,10,10,11
7700000000071700004
11_,11áâà1,11áâà2,12,14,14áâà2
7700000000071700005
14áâà3,16,18,18áâà2,20,22,22áâà1,24
7700000000071700006
26ª1,26ª2
7700000000071700007
2,3,3áâà2,4áâà1,5áâà1,5áâà2,6áâà1,7
7700000000071710001
7áâà1,8áâà1,8áâà2,9áâà1,9áâà2,10áâà1
7700000000071710002
10áâà2,10áâà3,10áâà4,13áâà1,14áâà1
7700000000071710003
14áâà2,14áâà3,14áâà4,14áâà6,14áâà7
7700000000071710004
14áâà8,14áâà12,14áâà15,15áâà1,15áâà2
7700000000071710005
15áâà2,16áâà1,16áâà1,16áâà2,16áâà3
7700000000071710006
16áâà9,16áâà13,16áâà14,17áâà1,18áâà1
7700000000071710007
18áâà2,18áâà3,18áâà4,18áâà5,18
7700000000071710008
19/4áâà1,19/4áâà2,19/4áâà3,19/4áâà4
7700000000071710009
19/4áâà5,20/2áâà1,20/2áâà2
7700000000071710010
45/1áâà1,45/1áâà2,45/1áâà3,45/1áâà4
7700000000071720001
1,3áâà1,3áâà2,3/1,5,9,11áâà1,11áâà2
7700000000071720002
11áâà4,11áâà11,13áâà1,13áâà3,15áâà1
7700000000071720003
15áâà2,15áâà4,15áâà5,17,19,29áâà1
7700000000071720004
7700000000071760001
3áâà7,3áâà8,3áâà9,3áâà10,3áâà11,3áâà13
7700000000071760002
7700000000071760003
3áâà19,3áâà20,3áâà22,3,3áâà1,5áâà1
7700000000071760004
7700000000071760005
7700000000071760006
5áâà13,5áâà14,5áâà15,5áâà16,5áâà26
7700000000071760007
7700000000071760008
7700000000071760009
7áâà14,7áâà19,7áâà20,7áâà21,7áâà22
7700000000071760010
7áâà23,7áâà24,7áâà25,7áâà27,7,7áâà1
7700000000071760011
7700000000071760012
7áâà7,7áâà8,7áâà9,7áâà10,7áâà11
7700000000071760013
7áâà12,7áâà13,7áâà14,7áâà15
7700000000071760014
7áâà16,7áâà17,9áâà1,9áâà2,9áâà3
7700000000071760015
7700000000071760016
9áâà10,9áâà11,9áâà12,9áâà13,9áâà1
7700000000071760017
7700000000071760018
9áâà8,9áâà9,9áâà10,9áâà11,9
7700000000071760019
7700000000071760020
11áâà6,11áâà7,13áâà1,13áâà2,13áâà3
7700000000071760021
7700000000071760022
7700000000071760023
15áâà5,15áâà6,15áâà7,15áâà11,15áâà13
7700000000071760024
15áâà17,15áâà18,15áâà19,15áâà20
7700000000071760025
15áâà21,15áâà22,15áâà23,15áâà23
7700000000071760026
15áâà24,15áâà2,17áâà1,17áâà1,17áâà2
7700000000071760027
7700000000071760028
7700000000071760029
7700000000071760030
17áâà17,17áâà18,17áâà19,17áâà26
7700000000071760031
17áâà1,17áâà4,17áâà1,17áâà2
7700000000071760032
17áâà3,17áâà4,17áâà5,17áâà1,19áâà1
7700000000071760033
7700000000071760034
19áâà9,19áâà10,19,21áâà1,21áâà2
7700000000071760035
21áâà3,21áâà4,21áâà5,21áâà6,21áâà7
7700000000071760036
7700000000071760037
7700000000071760038
7700000000071760039
21áâà21,21áâà22,21áâà23,21áâà24
7700000000071760040
21áâà25,22áâà1,22áâà2,22áâà3,22áâà10
7700000000071760041
22,22,23áâà1,23áâà2,23áâà3,23áâà4
7700000000071760042
23áâà5,24áâà1,24áâà2,24áâà3,24áâà4
7700000000071760043
24áâà5,24áâà6,24áâà7,24áâà8,24áâà9
7700000000071760044
24áâà10,24áâà11,25áâà1,25áâà2,25áâà3
7700000000071760045
25áâà6,25áâà7,25áâà12,25áâà1,25áâà3
7700000000071760046
25áâà4,25áâà5,27áâà1,27áâà2,27áâà3
7700000000071760047
7700000000071760048
27áâà9,27áâà10,28,28áâà10,28áâà14
7700000000071760049
28áâà15,28áâà16,28áâà17,28áâà18
7700000000071760050
30áâà1,30áâà3,30áâà5,30áâà6,30áâà7
7700000000071760051
30áâà8,30áâà9,32áâà1,32áâà2,32áâà3
7700000000071760052
32áâà6,32áâà10,32áâà11,34áâà1,34áâà2
7700000000071760053
34áâà3,34áâà4,34áâà5,34áâà6,34áâà8,35
7700000000071760054
7700000000071760055
7700000000071760056
36áâà11,38áâà1,38áâà2,38áâà3,38áâà4
7700000000071760057
38áâà5,38áâà6,38áâà7,38áâà14,38
7700000000071760058
40áâà1,40áâà2,40áâà3,40áâà4,40áâà1
7700000000071760059
40áâà2,40áâà3,42áâà1,42áâà2,42áâà3
7700000000071760060
42áâà4,42áâà5,42áâà7,42áâà9,42áâà10
7700000000071760061
7700000000071760062
42áâà18,42áâà21,42áâà22,46
7700000000071760064
6/28,8,10,10áâà1,12,14/32,16,18,18áâà1
7700000000071760065
4,8áâà2,8/1,12,12áâà1,12áâà2,12áâà3
7700000000071770001
12áâà4,12áâà5,12áâà8,12ª1,12ª2,13
7700000000071770002
14áâà1,14áâà2,14áâà5,14áâà6,14áâà7
7700000000071770003
14áâà8,14áâà10,14áâà11,14áâà13,15
7700000000071770004
16áâà6,16áâà7,16áâà8,16áâà11,16áâà12
7700000000071770005
16áâà14,16áâà16,16áâà17,17,17áâà2
7700000000071770006
17áâà3,18,19/4áâà3,27/2
7700000000071770007
2áâà1,2áâà2,2
7700000000071780001
4,4áâà1,5,5áâà1,6,6ª1,6ª1áâà1,6ª2,8
7700000000071790001
8áâà1,8ª1,10,10ª1,10ª2,10ª3,10ª4,10ª5
7700000000071790002
12,12áâà1,12áâà2,12ª1,12ª1áâà1,12ª2,12ª3
7700000000071790003
4,4áâà1,6áâà1,6áâà2,6áâà3,7áâà1,7áâà3
7700000000071820001
8,8áâà2,9,9_11,10,10áâà1,10áâà2
7700000000071820002
10áâà6,12áâà1,12áâà2,13áâà1,13áâà2
7700000000071820003
13áâà3,14,14áâà3,14áâà4,20áâà1,20áâà2
7700000000071820004
20áâà4,23áâà1,23áâà2,23áâà3,23áâà4
7700000000071820005
23áâà5,23áâà6,23áâà7,23áâà7,23áâà8
7700000000071820006
23áâà9,23áâà10,24áâà1,24áâà2,25áâà1
7700000000071820007
25áâà2,26,26áâà2,26áâà3
7700000000071820008
6,6áâà2,7,8,8áâà1,10,10áâà2,14áâà1
7700000000071830001
14áâà2,14áâà3,14áâà4,14áâà5,16áâà1
7700000000071830002
16áâà2,16áâà3,16áâà4,16áâà6,16áâà7
7700000000071830003
18/19áâà1,18/19áâà2,18/19áâà3,18/19áâà4
7700000000071830004
2/4,4áâà1,6áâà1,6áâà2,10áâà16,10áâà17
7700000000071840001
10áâà18,14áâà1,14áâà2,14áâà3,14áâà4
7700000000071840002
7700000000071840003
14áâà10,14áâà11,14áâà13,14áâà14
7700000000071840004
14áâà15,16áâà4
7700000000071840005
3/13áâà1,3/13áâà4,3/13áâà5,3/13áâà6
7700000000071850001
3/13áâà7,5áâà1,5áâà2,5áâà4,7/8áâà1
7700000000071850002
9/2áâà1,9/2áâà4,9/2áâà5,9/2áâà6
7700000000071850003
9/2áâà8,11/4áâà1,11/4áâà3,11/4áâà4
7700000000071850004
13áâà1,13áâà2,13áâà3,13áâà1,15
7700000000071850005
17áâà1,17áâà2,17/6áâà1,17/6áâà2
7700000000071850006
17/6áâà2,17/6áâà3,17/6áâà4
7700000000071850007
2áâà1,2/15áâà1,4/2áâà1,4/2áâà3,6_8áâà1
7700000000071850008
6_8áâà4,6_8áâà8,6_8áâà9,10/1áâà1
7700000000071850009
10/1áâà2,10/1áâà3,10/1áâà4,12áâà1
7700000000071850010
12áâà2,12áâà4,14/2áâà3
7700000000071850011
4,6áâà1,6áâà2,6áâà3,8/18áâà1,10áâà1
7700000000071860001
10áâà2,12áâà1,12áâà2
7700000000071860002
5áâà1,5áâà2,5áâà5
7700000000071860003
3áâà1,3áâà2,3áâà5,3áâà6,3áâà7,3áâà8
7700000000071860004
7áâà1,7áâà2,7áâà3,7áâà4,7áâà15
7700000000071860005
9/13áâà1,9/13áâà4,9/13áâà5,9/13áâà6
7700000000071860006
9/13áâà9
7700000000071860007
3,5,5áâà5,5áâà9,9,13áâà1,13áâà2,13áâà3
7700000000071870001
13áâà3,13áâà4,13áâà5,13áâà6,13áâà8
7700000000071870002
7700000000071870003
13áâà15,13áâà19,13áâà20,13áâà21
7700000000071870004
13áâà22,15,18,20áâà1,20áâà2,21áâà4
7700000000071870005
7700000000071870006
21áâà10,21áâà12,23,24,25_27áâà1,26
7700000000071870007
28áâà1,28áâà2,29,30,30áâà2,32,33
7700000000071870008
33áâà1,34/2áâà1,34/2áâà2,35áâà2,35áâà3
7700000000071870009
35áâà4,35áâà5,35áâà6,35áâà10,35áâà11
7700000000071870010
35áâà12,35áâà13,36,36áâà3,38/1áâà1,42
7700000000071870011
44,46
7700000000071870012
7700000000071880001
8áâà1,10áâà1,10áâà2
7700000000071890001
1/1,2,4áâà8,4áâà9,5,5áâà2,7
7700000000071890002
1/30áâà1,1/30áâà2,1/30áâà3,1/30áâà5
7700000000071900001
3áâà1,3áâà2,3áâà4,3áâà5,3áâà6,3áâà11
7700000000071900002
3áâà17,3áâà18,3áâà19,5áâà1,5áâà2,5áâà3
7700000000071900003
5áâà4,5áâà5,5áâà7,5áâà8,5áâà9,5áâà12
7700000000071900004
5áâà15,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000071900005
6áâà11,8áâà1,8áâà2,10áâà2
7700000000071900006
3,4áâà1,4áâà3,6áâà1,6áâà2,6áâà11,7,8
7700000000071910001
9áâà1,9áâà2,9áâà3,9áâà4,9áâà6,10áâà1
7700000000071910002
10áâà4,10áâà6,11áâà2,11áâà2,11áâà4
7700000000071910003
11áâà6,11áâà9,11áâà10,11áâà12,11áâà14
7700000000071910004
11áâà15,12,12áâà1,13áâà11,13áâà12
7700000000071910005
14áâà1,14áâà2,14áâà9,15ª,16áâà1
7700000000071910006
16áâà3,18,19áâà1,20áâà1,20áâà2,20áâà3
7700000000071910007
20áâà5,20áâà24,21,22áâà1,22áâà2,22áâà3
7700000000071910008
24áâà3,24áâà6,24áâà6,25,26/21áâà1
7700000000071910009
26/21áâà2,26/21áâà3,26/21áâà5
7700000000071910010
26/21áâà6,26/21áâà7,26/21áâà8,27áâà1
7700000000071910011
27áâà8,27áâà9,28,30áâà1,32áâà1,32áâà5
7700000000071910012
32áâà6,32áâà9,33áâà1,35,35áâà1,35áâà2
7700000000071910013
36,39áâà1,39áâà13,41áâà1,41áâà2,42áâà1
7700000000071910014
42áâà2,42áâà4,42áâà6,42áâà7,44áâà1
7700000000071910015
44áâà2,44áâà4,44áâà4,45,46áâà1,46áâà4
7700000000071910016
46áâà6,47áâà1,47áâà2,48áâà2,48áâà3,50
7700000000071910017
51áâà1,51áâà2,52áâà1,52/45,54áâà1
7700000000071910018
54áâà2,54/47áâà9,55/26áâà2,55/26áâà3
7700000000071910019
55/26áâà4,56áâà1,57áâà1,57áâà1,57áâà2
7700000000071910020
57áâà3,57áâà4,57áâà5,57áâà6,57áâà7
7700000000071910021
57áâà8,57áâà1,57áâà2,57áâà7,58áâà1
7700000000071910022
61áâà1,61áâà2,61áâà3,62áâà1,62áâà2
7700000000071910023
62áâà3,62áâà4,62áâà5,62áâà6,62áâà7
7700000000071910024
62áâà8,62áâà9,63áâà4,63áâà6,63áâà7
7700000000071910025
64áâà1,66,67áâà1,67áâà2,68,68/70áâà1
7700000000071910026
69,69/44,70áâà2,71áâà1,71áâà2,71áâà3
7700000000071910027
71áâà4,71áâà5,71áâà10,71áâà11,71áâà15
7700000000071910028
72áâà1,72áâà2,73áâà1,73áâà1,73áâà2
7700000000071910029
73áâà4,73áâà17,73áâà19,73áâà24,74áâà1
7700000000071910030
74áâà5,75,76/71áâà1,76/71áâà3
7700000000071910031
76/71áâà4,76/71áâà5,77áâà1,77áâà2
7700000000071910032
77áâà3,77áâà4,78áâà1,78áâà3,78áâà4
7700000000071910033
78áâà5,78áâà6,78áâà7,79,80/2áâà1
7700000000071910034
80/2áâà4,80/2áâà5,82áâà2,82áâà4,82áâà5
7700000000071910035
2,5áâà1,5áâà2,5áâà3
7700000000071920001
2/5áâà1,2/5áâà2,2/5áâà3,2/5áâà5,3
7700000000071930001
3/36áâà7,5áâà2,5áâà3,5áâà5,5,6áâà1
7700000000071930002
6áâà7,7áâà2,7,8áâà1,9áâà1,10,12,14
7700000000071930003
4,5áâà1,5áâà2,6,8,9áâà3,9/1áâà1
7700000000071940001
9/1áâà2,11/2áâà1
7700000000071940002
1áâà9,1áâà27,1,2áâà1,2áâà2,3áâà1
7700000000071950001
3áâà2,3áâà4,4áâà1,4áâà2,4áâà3,4áâà3
7700000000071950002
4áâà4,7áâà1,7áâà2,8áâà4,8áâà14,9,9áâà3
7700000000071950003
9áâà4,10áâà1,10áâà2,10áâà4,11áâà1
7700000000071950004
11áâà2,11áâà3,12,13áâà3,24/4áâà1
7700000000071950005
24/4áâà2
7700000000071950006
7,9áâà2,9áâà3,11áâà1,11áâà3,11áâà5
7700000000071960001
11/32áâà2,13áâà1,13áâà2
7700000000071960002
6_8áâà1,6_8áâà2,6_8áâà3,6_8áâà6
7700000000071960003
6_8áâà8,10áâà1,10áâà1,10áâà2,10áâà3
7700000000071960004
7700000000071960005
7700000000071960006
7700000000071960007
7700000000071960008
10áâà22,10áâà23,12áâà1,12áâà3,12áâà4
7700000000071960009
12áâà5,12áâà11,16áâà1,16áâà4,16áâà5
7700000000071960010
16áâà6,16áâà7,16áâà8,16áâà13,16áâà31
7700000000071960011
7700000000071960012
3áâà1,3áâà2,3áâà3,3áâà4,3áâà6,3áâà8
7700000000071960013
3áâà9,3áâà10,3áâà11,3áâà12,3áâà14,5
7700000000071960014
5/7áâà2,5_7áâà2,5_7áâà8,5
7700000000071960015
2,2/1áâà2,4áâà1,4áâà1,4áâà2,4áâà4
7700000000071960016
4áâà5,4áâà6
7700000000071960017
áâà3,1,1áâà1,1áâà2,1áâà3,1áâà4,1áâà5
7700000000071990001
7700000000071990002
1áâà12,1áâà13,1áâà14,3,3áâà1,3áâà2
7700000000071990003
7700000000071990004
3áâà9,3áâà10,3áâà11,3áâà12,3áâà13
7700000000071990005
8áâà9,8áâà10,8áâà11,8áâà11,8áâà12
7700000000071990006
3ª3áâà1,3ª3áâà2,3ª3áâà3,3ª3áâà4
7700000000071990007
3ª3áâà5,3ª3áâà6,3ª3áâà7,3ª3áâà8,3
7700000000071990008
3áâà1,5ª1áâà1,5ª1áâà2,7,7áâà1,8,8áâà2
7700000000071990009
7700000000071990010
3áâà14,3áâà15,3áâà17,3áâà18,3ª2
7700000000071990011
7700000000071990012
7700000000071990013
8áâà24,8áâà25,8áâà26,8áâà27,8áâà28,9
7700000000071990014
10,10áâà2,11,11ª2,13,13ª1,13ª1áâà2
7700000000071990015
13ª2,13ª2áâà1,15,17,19,19ª1,20,20ª1
7700000000071990016
21ª1,21ª2,23,23ª1,25,25áâà1,25áâà1,27
7700000000071990017
27,29,31áâà1,31áâà2,33áâà1,33áâà2
7700000000071990018
16,16áâà1,18,18áâà2,19,20,20áâà2
7700000000072000001
20áâà3,20áâà4,21,21áâà2,22,22áâà3
7700000000072000002
22áâà5,22ª2,22,22áâà2,22,23ª1,23ª2
7700000000072000003
23ª2áâà6,24,24áâà1,24,24áâà1,25
7700000000072000004
26ª1,26ª2,26ª3,27,28,29,30,30áâà1
7700000000072000005
30áâà2,31,31áâà1,31áâà2,31áâà3,31
7700000000072000006
34,34áâà1,34áâà2,34áâà3,34áâà4,34áâà5
7700000000072000008
34áâà6,34áâà7,34áâà8,34áâà10,34áâà12
7700000000072000009
34áâà13,34áâà14,34áâà15,34áâà21,36
7700000000072000010
7700000000072000011
36áâà7,36áâà7,36áâà7,36áâà8,36áâà9
7700000000072000012
36áâà10,36áâà11,36áâà12,36áâà15
7700000000072000013
36áâà17,36áâà23,36áâà27,36áâà28
7700000000072000014
36áâà32,36áâà38,36áâà39,36áâà41
7700000000072000015
36áâà42,36áâà50,36áâà51,36áâà52
7700000000072000016
36áâà56,36áâà57,36áâà58,36áâà59
7700000000072000017
36áâà60,36ª21áâà10,36ª22,36ª43áâà11
7700000000072000018
36ª45áâà15,36,36áâà1,36áâà2,36áâà3
7700000000072000020
36áâà4,36áâà5,37áâà1,38áâà1,38áâà2
7700000000072000021
7700000000072000022
38áâà3,39,39áâà1,39áâà2,40,41,41áâà3
7700000000072000024
1/7,1/7áâà2,2/1áâà1,2/1ª1,2/1ª1,3
7700000000072000025
3áâà2,4/2,4/2áâà2,5ª3,5/3,5/3áâà4
7700000000072000026
41,42áâà1,43,43áâà2,45,46áâà1,53
7700000000072000027
52,52áâà1,55,55áâà2
7700000000072000028
7700000000072000029
12áâà6,12áâà8,12áâà9,12áâà10,12áâà11
7700000000072000030
12áâà13,12áâà21,12áâà26,12,13,14
7700000000072000031
14áâà2,14áâà4,14,14áâà1,14áâà2
7700000000072000032
14áâà3,14áâà4,14áâà5,14áâà6
7700000000072000033
14áâà7,14áâà8,14áâà9,14áâà10
7700000000072000034
14áâà11,14áâà12,14áâà13,14áâà15
7700000000072000035
14áâà17,14áâà18,14áâà19,14áâà20
7700000000072000036
14áâà23,14áâà24,14áâà25,14áâà49
7700000000072000037
14áâà50,14áâà51,14áâà52,14áâà55
7700000000072000038
14áâà56,14,15,17
7700000000072000039
59,59áâà3,61,63,65,67ª1,67ª2,69ª1,69ª2
7700000000072000040
69ª3,69ª4,69ª5,69ª6,71,71áâà4,71áâà10
7700000000072000041
71áâà11,71áâà12,71áâà13,71áâà14
7700000000072000042
áâà16
7700000000072000007
76,76áâà1,78,80,82,84,86,86áâà1,88,88
7700000000072000043
14,16,18,18áâà1
7700000000072030001
1,2,3,4,4ª2,5,6,6ª1,6ª1áâà2,6ª1áâà3,8
7700000000072030002
9,9áâà2,10ª1,10ª2,11,11áâà1,13
7700000000072030003
7700000000072040001
2ª12,2ª13,2ª14,3ª4,3ª5,3ª6,4ª9,4ª10
7700000000072060001
4ª11,4ª15,10,14/19áâà2,14/19áâà3
7700000000072060002
14/19áâà4,14/19áâà5,14/19áâà6,16áâà1
7700000000072060003
7700000000072060004
16áâà7,16áâà8,16áâà9,16áâà12
7700000000072060005
3,4áâà1,4áâà2,4áâà5,5,6,7áâà1,7áâà2
7700000000072070001
9áâà1,9áâà2,9áâà3,9áâà4,10áâà1,11áâà1
7700000000072070002
11áâà2,11áâà3,12,12áâà1,13,13áâà2
7700000000072070003
15áâà1,15áâà2
7700000000072070004
1,1áâà2,1áâà2,1áâà3,1áâà1,1áâà2
7700000000072080001
1áâà3,3,3áâà1,3áâà2,3áâà4,3áâà5,3áâà8
7700000000072080002
5áâà6
7700000000072080003
7700000000072080004
7áâà1,9,9,9áâà1,11áâà1
7700000000072080005
1/2,3áâà1,3áâà2,4,4áâà2,5áâà1,5áâà2
7700000000072090001
5áâà3,6,6áâà1,8áâà1,8áâà2,8áâà3
7700000000072090002
8/3áâà2,9/9,10/2áâà1,11/8áâà1,11/8áâà2
7700000000072090003
11/8áâà3,12/2áâà1,12/2áâà2,12/2áâà3
7700000000072090004
12/2áâà4,12/2áâà5,12/2áâà6,12/2áâà7
7700000000072090005
12/2áâà8,12/2áâà9,12/2áâà10,12/2áâà14
7700000000072090006
12/2áâà19,13,14/1áâà1,14/1áâà2
7700000000072090007
14/1áâà3,14/1áâà4,15,15/10áâà3,16/2
7700000000072090008
16/2áâà6,16/2áâà8,16/2áâà9,17/8áâà5
7700000000072090009
17/9,18,19/11áâà1,19/11áâà2,19/11áâà3
7700000000072090010
19/11áâà4,19/11áâà7,20,20áâà2,20áâà3
7700000000072090011
20áâà4,20áâà7,21/12áâà1,21/12áâà2
7700000000072090012
21/12áâà3,21/12áâà4,21/12áâà5,22/2áâà1
7700000000072090013
22/2áâà2,22/2áâà3,22/2áâà4,22/2áâà5
7700000000072090014
22/2áâà6,22/2áâà7,24/1,25,26,27,28,29
7700000000072090015
30/2,30/2áâà2,31/16,32/1áâà1,32/1áâà2
7700000000072090016
32/1áâà3,32/1áâà4,32/1áâà7,32/1áâà8
7700000000072090017
33/19áâà1,33/19áâà2,34/18,35áâà1
7700000000072090018
7700000000072090019
35áâà7,35áâà8,36áâà2,36áâà3,36áâà4
7700000000072090020
36/21áâà1,37áâà1,37áâà2,37áâà3,37áâà4
7700000000072090021
37áâà5,37áâà6,38,40áâà3,40/2áâà1
7700000000072090022
7700000000072100001
4áâà7
7700000000072100002
1áâà1,1áâà3,1áâà4,1áâà4,1áâà5,1áâà7
7700000000072110001
1ª1,1ª2,1ª3
7700000000072110002
8,10áâà1
7700000000072120001
3/2áâà1,3/2áâà2,5_7áâà1,5_7áâà2,9,11,13
7700000000072120002
1áâà1,1áâà2,4áâà1,4áâà2,4áâà3,4áâà6,6
7700000000072120003
7700000000072130001
9áâà1,9áâà2,9áâà27,22,22áâà2
7700000000072140001
3áâà1,3áâà2,3áâà4,3áâà5,5áâà1,5áâà2
7700000000072140002
5áâà3,5áâà4,5áâà5,5áâà7,5áâà8,5áâà9
7700000000072140003
5áâà10,5áâà12,5áâà13,5áâà14,5áâà15
7700000000072140004
5áâà18,5áâà19,5áâà20,6,6áâà2,8,12áâà2
7700000000072140005
1,3,3áâà1,3áâà3,11,15,15áâà2,15áâà3
7700000000072160001
15áâà4,15áâà5,15áâà6,15áâà8,15áâà11
7700000000072160002
12,12ª1,12ª1áâà1,12ª2,12ª2áâà1,16,18
7700000000072160003
2,2áâà2,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000000072180001
4áâà7,5,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000072180002
6áâà6,6áâà7,8áâà1,8áâà3,8áâà4,8áâà5
7700000000072180003
3áâà1,3áâà2,4,6áâà1,7áâà1,8áâà1,8áâà2
7700000000072200001
10,12áâà1,12áâà2
7700000000072200002
2,3áâà2,3áâà3,3áâà6,3ª1,3ª2,4ª1,4ª2,5
7700000000072210001
6áâà2,6ª1,6ª2,7,7áâà2,8ª1,8ª2,8ª3,9,9
7700000000072210002
11/6
7700000000072210003
10áâà1,12,12áâà2,12áâà3,12áâà4,12áâà5
7700000000072210004
13ª1,13ª2,13ª3,13ª4,14,14,15,15áâà2
7700000000072210005
15,16ª1,16ª2,17ª1,17ª2,17ª3,17ª4,18
7700000000072210006
19ª1,19ª2,19ª3,19ª4,19ª4áâà2,20/10ª1
7700000000072210007
20/10ª2,21ª1,21ª2,21ª2áâà2,22,23áâà2
7700000000072210008
23ª1,23ª2,23ª3,23ª4,23ª5,23ª6,23ª7,24
7700000000072210009
25ª2,25ª2áâà1,25/23,26,26áâà2,26áâà3
7700000000072210010
7700000000072220001
2/1áâà1,2/1áâà2,2/1áâà3
7700000000072220002
2,2áâà1,7,7áâà1,7áâà2,7áâà3,7áâà5
7700000000072230001
7áâà6,9áâà1,9áâà2,9áâà3,9áâà4,9áâà5
7700000000072230002
9áâà6,9áâà7,9áâà8,9áâà9,9áâà11,9áâà12
7700000000072230003
1,4áâà1,5,5áâà2,6áâà1,7áâà1,7áâà2
7700000000072240001
7áâà3,9,9áâà2
7700000000072240002
3áâà1,3áâà2,4áâà1,4áâà2,5áâà1,5áâà2
7700000000072250001
5áâà3,5áâà4,6,7áâà1,7áâà2,7áâà3,7áâà4
7700000000072250002
8áâà1,8áâà3,10áâà1
7700000000072250003
10áâà1,12,12áâà4,14,16áâà2,16áâà4,16
7700000000072260001
18áâà1,18áâà1,18áâà4,18ª2,18,18
7700000000072260002
20áâà1,20áâà3,20áâà1,20áâà7,20áâà8
7700000000072260003
20áâà9,22áâà1,28/35áâà1,28/35áâà1
7700000000072260004
1/2,3áâà1,3áâà2,5áâà1,7,8,11,11áâà1
7700000000072260005
11áâà2,13,13áâà4,13áâà6,13áâà7,13áâà8
7700000000072260006
13áâà9,13áâà36,15,17
7700000000072260007
19_23,25áâà13,25ª1,25ª10,25_27áâà7
7700000000072260008
25_27áâà8,25_27áâà9,25_27áâà10
7700000000072260009
25_27áâà12,25_27áâà14,25_27ª3áâà5,31
7700000000072260010
2áâà1,2áâà2,2áâà3,2/4,6áâà1,6áâà2
7700000000072270001
6áâà3,6áâà4,8,12
7700000000072270002
1áâà1,1áâà2,3,3áâà3
7700000000072270003
2áâà1,2áâà2,2áâà3,2áâà4
7700000000072280001
21_23áâà1,21_23áâà3,21_23áâà4
7700000000072280002
21_23áâà6,21_23áâà9,27/26áâà1
7700000000072280004
27/26áâà2,27/26áâà3,27/26áâà4,29/1,31
7700000000072280005
31áâà1,33,33áâà1,33áâà2,33áâà3
7700000000072280006
33áâà4,33áâà1,35áâà1,35áâà2,35áâà3
7700000000072280007
35áâà4,35áâà5,35áâà6,35áâà6,35áâà7
7700000000072280008
7700000000072280009
35áâà16,35áâà19,35áâà25,35áâà28
7700000000072280010
35áâà29,35áâà30,35áâà31,35áâà32
7700000000072280011
35áâà33,35áâà39,35áâà40
7700000000072280012
35áâà
7700000000072280003
14,16,18,18,18áâà1,18áâà3,20,20áâà2
7700000000072290001
22áâà4
7700000000072290002
7,10áâà1,10áâà1,10áâà2,11áâà1,11áâà2
7700000000072290003
11áâà4,11/2áâà1,12,12áâà3
7700000000072290004
3,4,7,8,9,11,12,14/17áâà1,14/17áâà2,15
7700000000072310001
15áâà2,18,18áâà2,20áâà1,20
7700000000072310002
13,13áâà2,17,17áâà2,25/5áâà1,25/5áâà2
7700000000072330001
2,3,4,4,6áâà1,6áâà2
7700000000072340001
3áâà1,24,24áâà2,24áâà3,26,26áâà2,26
7700000000072360001
28,28áâà2,32,34,36,36áâà2,38,38áâà1
7700000000072360002
7700000000072360003
2,4,4áâà2,4áâà4,6,6áâà2,8,10,10,12,14
7700000000072360004
16,16áâà2,18
7700000000072360005
19/2,21áâà1,21áâà2,23,25áâà1,27,27áâà2
7700000000072370001
29,29áâà2,31áâà1,31áâà2,31áâà3,31,33/1
7700000000072370002
2,3,4,5áâà1,5áâà2,5/2áâà1,6áâà1,7
7700000000072370003
7áâà1,8,8áâà2,8/9áâà1,9,10áâà1,10áâà2
7700000000072370004
10áâà3,10áâà4,10áâà5,10áâà8,11,12áâà1
7700000000072370005
12áâà2,12áâà4,14áâà1,14áâà2,14áâà3
7700000000072370006
14áâà4,16,17áâà1,17áâà2
7700000000072370007
1,2áâà1,2áâà2,4,5áâà1,5áâà2,5áâà3,6/1
7700000000072380001
7áâà1,7áâà2,8áâà2,8/2,9,10áâà2,10/1
7700000000072380002
12/5áâà5,12/5áâà7,15,15áâà2,17áâà1
7700000000072380003
19áâà5
7700000000072380004
1áâà1,1áâà2,1áâà3,1áâà5,2
7700000000072390001
2áâà1,2áâà2,4,4áâà1
7700000000072400001
2,2áâà2,4,6,7,7áâà1,7áâà2,7áâà3,7áâà4
7700000000072430001
7,7,10,12,14,16,18
7700000000072430002
1,1ª2,2,2,3,3ª2,3ª3,4,5ª1,5ª2,6,7ª1
7700000000072440001
7ª2,7ª3,7ª4,7ª5,7ª6,8,8,9ª1,9ª2,9ª3
7700000000072440002
9ª4,10ª1,10ª2,10ª3,10ª4,11ª1,11ª2,11ª3
7700000000072440003
11ª4,11ª5,12ª1,12ª2,12ª3
7700000000072440004
8,8áâà1,12,12áâà1,12áâà2,12ª1,12ª1áâà1
7700000000072450001
14,14áâà1,14áâà2,14áâà3,14ª1,14ª2
7700000000072450002
14ª2áâà1,14ª3
7700000000072450003
2ª1,2ª1áâà1,2ª1áâà2,4,4áâà1,6ª1
7700000000072460001
6ª1áâà1,6ª2,8,10,12ª1,12ª2,14,14áâà1
7700000000072460002
16ª1,16ª1áâà1,16ª2
7700000000072460003
1,1áâà1,1áâà2,2,2áâà1,3,4,7,8
7700000000072470001
2,2áâà1,2,4áâà1
7700000000072490001
áâà1
7700000000072500001
2áâà1,2,14áâà1,14áâà2
7700000000072510001
7700000000072530001
2áâà7,2áâà8,2áâà9,2áâà9,2áâà13,2áâà16
7700000000072530002
2áâà18,2áâà32,2áâà34,2áâà37,2áâà40
7700000000072530003
2áâà41,2áâà43,2áâà44,2áâà45,2áâà46
7700000000072530004
2áâà47,2áâà48,2áâà49,2áâà51,2áâà53
7700000000072530005
2áâà54,2áâà55,2áâà61,2áâà62,2áâà63
7700000000072530006
2áâà64,10
7700000000072530007
áâà17,áâà18,áâà19,áâà20,1,4,4áâà1
7700000000072540001
4áâà2,4áâà3,4áâà4,6,8
7700000000072540002
7700000000072540003
2,4áâà1
7700000000072550001
2,3,3áâà2,6
7700000000072580001
4áâà2,4áâà5,4áâà7,4áâà8,4áâà9,4áâà10,12
7700000000072600001
6,6áâà2,10,20áâà1
7700000000072610001
2,2áâà2,2,7
7700000000072620001
7áâà2
7700000000072620002
7,7áâà2,8
7700000000072630001
áâà33,áâà33,áâà33,6,6,8áâà1
7700000000072640001
8,8áâà1,8áâà2,8áâà3,12áâà1,12áâà2
7700000000072650001
12áâà3,12áâà4
7700000000072650002
3,7,12,14,15,15áâà2,15áâà3,17,17áâà1,20
7700000000072660001
1áâà1,6,6áâà2,6áâà3,6áâà4,6áâà5,6áâà6
7700000000072670001
6áâà7,10,14,18áâà1
7700000000072670002
2,4,4áâà2,4áâà3,4áâà4,4áâà9,6
7700000000072680001
7700000000072680002
4áâà1,4,4áâà1,4,4áâà1,4áâà2
7700000000072700001
4áâà3,6,6áâà1,6áâà2,6áâà3,6áâà4
7700000000072700002
6áâà5,6áâà1,6áâà2,8áâà1,10áâà1
7700000000072700003
7700000000072700004
19áâà1
7700000000072710001
7700000000072710002
7700000000072720001
12áâà1,12áâà2,12áâà1,17áâà1
7700000000072730001
7700000000072740001
7700000000072740002
2áâà13,2áâà14,2áâà15,6
7700000000072740003
7700000000072750001
7700000000072760001
5,7áâà1,7áâà2
7700000000072790001
7700000000072800001
4áâà1,4áâà3,4áâà4,4
7700000000072820001
7700000000072820002
4,4áâà2,4,4áâà1
7700000000072830001
5ª2áâà1,5ª2áâà2,5ª2áâà3,5ª2áâà4,5ª2áâà5
7700000000072840001
2,3,7,9
7700000000072840002
áâà1,áâà2,áâà3,áâà5,6ª2,6ª2áâà1
7700000000072860001
6ª2áâà2,6ª2áâà3,6ª2áâà4,13,20áâà4
7700000000072860002
7700000000072870001
2áâà1,2áâà2,7
7700000000072880001
7700000000072900001
7,7ª1,7ª1áâà1
7700000000072910001
7700000000072910002
4,4áâà1,5
7700000000072920001
8áâà1,14ª1
7700000000072930001
áâà2,2ª1,2ª2,2ª3,2ª4,2,2áâà1,2áâà2
7700000000072930002
7700000000072930003
2áâà8,2áâà9
7700000000072930004
áâà3
7700000000072930005
7700000000072940001
áâà1,áâà2,3ª1,3ª2,13
7700000000072940002
4,4áâà1,4áâà2,4áâà3,4áâà4,4áâà17
7700000000072950001
4áâà18,4
7700000000072950002
7700000000072960001
7700000000072970001
8,14
7700000000072980001
7700000000072990001
3,3áâà1,3áâà2
7700000000073000001
1,1,2
7700000000073010001
1áâà1,1áâà2,1áâà3,1áâà4,8,17
7700000000073020001
7700000000073030001
1áâà2
7700000000073030002
1,1ª,1ª,1ª,1ª,1ª,1ª,1ª,1ª
7700000000073050001
1áâà2,1áâà2,1áâà3,1áâà3,1áâà3
7700000000073050002
1áâà3,1áâà4,1áâà4,1áâà5,1áâà5,1áâà6
7700000000073050003
1áâà6,1áâà8,1áâà9,1áâà10,1áâà10
7700000000073050004
1áâà11,1áâà11,1áâà11,1áâà12,1áâà13
7700000000073050005
1áâà14,1áâà15,1áâà16,1áâà17,1áâà17
7700000000073050006
1áâà17,1áâà17,1áâà17,1áâà17,1áâà19
7700000000073050007
1áâà22,1áâà22,1áâà22,1áâà22,1áâà22
7700000000073050008
1áâà22,1áâà22,1áâà24,1áâà24,1áâà25
7700000000073050009
1áâà26,1áâà26,1áâà27,1áâà28,1áâà29
7700000000073050010
1áâà29,1áâà30,1áâà30,1áâà31,1áâà31
7700000000073050011
1áâà31,1áâà32,1áâà33,1áâà34,1áâà34
7700000000073050012
7700000000073090001
7áâà1,7áâà4,9,9áâà1,9áâà2,9áâà4
7700000000073090002
9áâà5,9áâà6,9áâà12,15,15áâà1,15áâà2
7700000000073090003
7700000000073090004
15áâà9,15áâà10,15áâà11
7700000000073090005
4,4áâà1,4ª1,8,8ª1,8ª1áâà1,8ª1áâà2
7700000000073100001
8ª1áâà3,8ª3,8ª3áâà1,8ª3áâà2,8ª3áâà3,10
7700000000073100002
2áâà1,3,4,6,10,10áâà2,13áâà1,13áâà2
7700000000073110001
15áâà1,23_25,27áâà1
7700000000073110002
7700000000073140001
1,5,10,10áâà1,11,11áâà1,13,13áâà1
7700000000073150001
13áâà2,13,13,13,15,15ª1,15ª2
7700000000073150002
15ª2áâà1,15ª2áâà2,15ª2áâà3,15ª3,15ª4
7700000000073150003
15ª4áâà1,15ª4áâà2,17,17áâà1,17áâà2
7700000000073150004
17ª1,17ª1áâà1,18,18,19,20,20áâà1
7700000000073150005
20áâà2,22,22áâà1,24,24áâà1,24áâà2,25
7700000000073150006
26,27,27áâà1,27áâà2,28,28áâà1,29
7700000000073150007
29áâà1,30,30áâà1,30áâà2,30,32,33
7700000000073150008
33áâà1,33áâà2,34,34áâà1,34áâà2,35
7700000000073150009
5ª3,5ª3áâà1,5ª3áâà2,5ª3áâà3,5ª3áâà4
7700000000073160001
5ª3áâà5,5ª3áâà6,5ª3áâà10,5ª3áâà12
7700000000073160002
2,2áâà1,2áâà2,2áâà3,2áâà4,2áâà5,3áâà1
7700000000073160003
4,4áâà1,4áâà2,4áâà3,4áâà4,4áâà6,4áâà7
7700000000073160004
5ª3áâà13,5ª4,6,6áâà1,6áâà4,6áâà6,6áâà8
7700000000073160005
6áâà9,6áâà10,6áâà23,6áâà28,6áâà29,6ª2
7700000000073160006
6ª2áâà1,6ª2áâà2,6ª2áâà3,7,7áâà1,7áâà2
7700000000073160007
7áâà3,8,8áâà1,9,9áâà1,9áâà2,9áâà3
7700000000073160008
9áâà4,9ª2,9ª2áâà1,9ª3,9ª3áâà1,9ª3áâà2
7700000000073160009
10ª1,10ª1áâà1,10ª1áâà2,10ª1áâà3
7700000000073160010
10ª1áâà4,10ª1áâà5,10ª1áâà6,10ª1áâà7,11
7700000000073160011
11ª1,11ª2,11ª2áâà1,11ª2áâà2,12ª1
7700000000073160012
12ª1áâà1,12ª2,12ª2áâà2,12ª2áâà3,12ª3
7700000000073160013
12ª3áâà2,12ª4,13,13áâà3,13áâà4,13áâà13
7700000000073160014
2,2áâà1,2áâà2,3,4,4áâà1,5,6,7,8,8áâà1
7700000000073170001
8áâà2,9,10,11,11áâà1,11áâà2,12,13,14
7700000000073170002
14áâà1,15,15áâà1,15áâà2,16,16áâà1
7700000000073170003
16áâà2,17,18,18áâà1,18áâà2,19,20,21
7700000000073170004
21áâà1,21áâà2,22,22áâà1,23,23áâà1,24
7700000000073170005
24áâà1,26,26áâà1,26áâà2,28,30,30áâà1
7700000000073170006
32,32áâà1,34,34áâà1
7700000000073170007
1,1áâà1,2áâà1,3,3áâà2,5ª1,5ª1áâà1,5ª2
7700000000073180001
5ª3,5ª4,7,7áâà1,9,9áâà1,9áâà2,9áâà3,11
7700000000073180002
11áâà1,11áâà2,13,13áâà1,15,15áâà1
7700000000073180003
15áâà2,15áâà3,17,17áâà1,17áâà2,19
7700000000073180004
1,2,2áâà1,3,3áâà1,4,4áâà1,4áâà2,5,6,7
7700000000073190001
7áâà1,8,9,9áâà1,9áâà2,10,11,11áâà1,12
7700000000073190002
12áâà1,13,14,15,15áâà1,16,16áâà1
7700000000073190003
16áâà2,17,18,19,21,21áâà1,22,23,24
7700000000073190004
24áâà1,25,25áâà1,25áâà2,26,27,29,33
7700000000073190005
33áâà1,35,35áâà1,37,39,41,41áâà1,43
7700000000073190006
43áâà1,43áâà2,43,45,45áâà1,47,51
7700000000073190007
7700000000073200001
5áâà25,5áâà26,5áâà27,5áâà29,5áâà30
7700000000073200002
1,1áâà1,1áâà2,1áâà3,1áâà4,1,5,5áâà2
7700000000073200003
7700000000073200004
5áâà9,5áâà11,5áâà12,5áâà13,5áâà14
7700000000073200005
7700000000073200006
5áâà36,5áâà37,5áâà38,5áâà39,5áâà41
7700000000073200007
5áâà31,5áâà32,5áâà33,5áâà34,5áâà35
7700000000073200008
5áâà42,5áâà43,5áâà44,7,7áâà1,7áâà2
7700000000073200009
7áâà3,7áâà4,9,9áâà1,9áâà2,9áâà3
7700000000073200010
7700000000073200011
9áâà10,9
7700000000073200012
1áâà1,1áâà2,1áâà3,2,4
7700000000073210001
3ª1,3ª1áâà1,3ª1áâà2,3ª2,4,5ª1,5ª2
7700000000073240001
17,17áâà2
7700000000073260001
31áâà1,31áâà2,31áâà7
7700000000073260002
28áâà4,28áâà5,28áâà9,28áâà10
7700000000073260003
12,12áâà4,14,14áâà1,28áâà1,28áâà3
7700000000073260004
28áâà18,28áâà20,28áâà23,28áâà24
7700000000073260005
28áâà25,30
7700000000073260006
30,30,32,32áâà2,32ª2,32ª2áâà2
7700000000073260007
32ª2áâà3,34áâà1,34áâà2,36,36,42áâà1
7700000000073260008
42áâà3,46,46áâà4,46áâà5,46áâà6
7700000000073260009
46áâà7,46áâà8,46áâà9,46áâà10,48
7700000000073260010
29,31,33,33,35,37,39,39,40,41,42,43
7700000200045440001
124575
45272591000
44,46,48,50,52
7700000200045440002
19,21,23áâà,23áâà1,25,27áâà,27áâà1
7700000000073290001
29,31áâà1
7700000000073290002
1,1áâà1,1áâà2,2,2,2áâà1,4,4áâà1,8
7700000000073330001
3áâà1,15
7700000000073340001
7700000000073340002
1áâà1,1áâà2,1ª1,1ª2,1ª3,1ª4,1ª5,1,2
7700000000073420001
2áâà1,2áâà2,4ª1,4ª1áâà1,4ª2,4ª3,4ª4
7700000000073420002
3/9,4áâà1,4áâà2,6áâà1,6áâà2,8,8
7700000000073450001
10áâà1,10áâà2,11,11áâà1,12/14áâà1
7700000000073450002
13áâà1,15,18,18áâà2,20áâà1,20áâà2
7700000000073450003
21áâà1,21áâà2,21áâà3,21áâà5,21áâà7
7700000000073450004
21áâà16,21áâà17,21áâà18,21áâà19
7700000000073450005
21áâà20,21áâà21,21áâà22,22áâà1,22áâà2
7700000000073450006
25áâà1,25áâà2,25áâà3,29áâà1,29áâà2
7700000000073450007
29áâà3,29áâà4,29áâà5
7700000000073450008
7700000000073460001
1áâà7,1áâà8,1áâà9,1áâà10,1áâà11
7700000000073460002
1,1áâà1,1áâà2,3,3áâà1,3,6,6,7,7áâà1
7700000000073470001
9,9áâà1,9áâà2,11,11áâà1,11áâà2,13,14
7700000000073470002
áâà2,1áâà1,1áâà1,1áâà2,1áâà4,1áâà5
7700000000073480001
1áâà6,1áâà9,1áâà15,1áâà16,1áâà17
7700000000073480002
1áâà18,1áâà19,1áâà20,1áâà20,1áâà25
7700000000073480003
7700000000073500001
6,8,10,14
7700000000073500002
2,2áâà1,2áâà2,2áâà3,12áâà1
7700000000073510001
áâà1
7700000000073520001
1,2áâà1,2áâà2,2áâà3,2áâà4,2áâà1
7700000000073520002
2áâà2,3,3áâà1,3áâà2,3áâà3,3áâà4,3áâà5
7700000000073520003
3áâà6,3áâà7,3áâà8,3
7700000000073520004
1,1áâà1,1áâà2,3
7700000000073530001
2áâà4,4,4áâà2,4áâà3,5,5áâà1,5áâà2
7700000000073540001
5áâà3,5áâà5,5áâà7,5áâà8,6,6áâà1,6áâà2
7700000000073540002
2,2áâà1,2áâà2,2áâà3,2áâà4
7700000000073550001
1áâà1,1áâà3,1áâà4,1áâà5,1áâà6,1áâà7
7700000000073610001
1áâà8,1áâà13
7700000000073610002
áâà7,5,5áâà2,5áâà3,5áâà4,5áâà5,5áâà6
7700000000073620001
5áâà7,5áâà8,5áâà9,5áâà10,5áâà11
7700000000073620002
áâà1,áâà3,áâà7,áâà8,áâà9,áâà10,áâà11
7700000000073630001
áâà12,áâà13,áâà14,áâà15,áâà16,áâà17
7700000000073630002
áâà18,áâà19,áâà20,áâà21,áâà22,áâà23
7700000000073630003
7700000000073630004
áâà7,áâà14
7700000000073660001
áâà1,áâà2,áâà3,áâà4,áâà5,áâà6,áâà9
7700000000073660002
áâà10,áâà11,áâà12,áâà13,áâà15,áâà16
7700000000073660003
7700000000073670001
7700000000073670002
7700000000073680001
7700000000073680002
1áâà13,1áâà14,1áâà25,1áâà26,3áâà1
7700000000073680003
1,1áâà2,1áâà3,1áâà4,1áâà1,1áâà2
7700000000073700001
1áâà1,1áâà1
7700000000073730001
7700000000073730002
14ª1,14ª2,14ª3,14ª4
7700000000073740001
8,18
7700000000073790001
7áâà6,7áâà9
7700000000073790002
2,6,14áâà1,14áâà2
7700000000073820001
7,7áâà1,9,11,13,13áâà1,13ª1,15,15áâà1
7700000000073910001
15ª1,17,17áâà1,19ª1áâà1,21,21áâà1
7700000000073910002
21áâà2,21áâà3,25áâà1,27,27ª1,27ª2
7700000000073910003
27ª2áâà1,27ª3,27ª3áâà1,27ª3áâà2
7700000000073910004
28áâà1,29áâà1,29áâà2,29áâà3,29ª1,30
7700000000073910005
4ª1,4ª1áâà1,4ª2,6ª1,6ª2,6ª2áâà1,6ª3
7700000000073920001
6ª4,8,8áâà1,8ª1,10áâà1,12,12áâà1,12ª1
7700000000073920002
12ª1áâà1,12ª1áâà2,14,16,16áâà1,16áâà3
7700000000073920003
16ª1,18,18áâà1,18áâà2,18ª1,18ª2
7700000000073920004
18ª2áâà1,18ª3,20,20ª1,22,22áâà1,22ª1
7700000000073920005
2,4,4áâà1,4áâà2
7700000000073930001
7700000000073950001
áâà1,áâà2
7700000000200000001
7700000000210330001
7700000000239130001
2,2ª1,4,8,10
7700000000239130002
7700000000239220001
1,1áâà1,1
7700000000239380001
áâà1,áâà2,1,2,2áâà1,2áâà1,2áâà2,2ª1,3
7700000000239390001
3áâà2,3áâà3,4,4,4áâà1,4,5,6áâà1
7700000000239390002
8áâà1,8áâà2,8áâà4,8áâà5,8áâà7,8áâà9
7700000000239390003
8áâà10,8áâà11,8áâà15,8,9,10,11,11áâà1
7700000000239390004
11ª1,12áâà2,12áâà3,12áâà4,12áâà4
7700000000239390005
12áâà5,12áâà6,12áâà7,12áâà9,13,14
7700000000239390006
14áâà1,15,15,16,16áâà1,16áâà2,16áâà3
7700000000239390007
7700000000239390008
7700000000239390009
7700000000239390010
7700000000239390011
7700000000239390012
7700000000239390013
16áâà30,16,16áâà1,16áâà2,16áâà3,17
7700000000239390014
18,18áâà2,18áâà3,18áâà4,18áâà5,18áâà6
7700000000239390015
19,20,21,21_áâà1,21_áâà2,21_áâà3
7700000000239390016
21áâà1,21áâà2,21áâà3,21áâà4
7700000000239390017
21áâà5,21áâà6,21áâà7,21áâà8
7700000000239390018
21áâà9,21áâà10,21áâà11,21áâà12
7700000000239390019
21áâà13,21áâà14,21áâà1,21áâà2
7700000000239390020
21áâà3,21áâà4,21áâà5,23áâà1,23áâà2
7700000000239390021
23áâà7,23áâà8,25áâà1
7700000000239390022
7700000000310800001
2,3,4,5,5,6,7,7áâà1,8,9,9,10,11,12
7700000000310800002
13,13áâà2,13áâà3,15,15,16,17,17áâà1
7700000000310800003
18,19,19,20,20áâà2,21,21,22,23,24,25
7700000000310800004
27,29,29,31
7700000000310800005
1,2,2áâà2,2áâà3,3,3áâà1,3áâà2,3áâà3
7700000000313070001
3áâà1,4,4áâà10,4áâà11,4áâà11,4áâà12
7700000000313070002
4áâà13,4áâà14,4áâà15,4áâà18,4áâà19
7700000000313070003
4áâà20,4áâà22,4áâà23,4áâà29,4áâà29
7700000000313070004
4áâà31,4áâà32,4áâà33,4áâà48,4áâà55
7700000000313070005
4áâà56,4áâà57,4áâà58,4áâà59,4áâà62
7700000000313070006
4áâà63,4áâà64,4áâà68,4áâà69,4áâà70
7700000000313070007
4áâà71,4áâà72,4áâà73,4áâà74,4áâà75
7700000000313070008
4áâà76,4áâà78,4áâà79,4áâà80,4áâà81
7700000000313070009
4áâà82,4áâà83,4áâà84,4áâà85,4áâà86
7700000000313070010
4áâà87,4áâà88,4áâà89,4áâà90,4áâà91
7700000000313070011
4áâà92,4áâà93,4áâà94,4áâà95,4áâà96
7700000000313070012
4áâà97,4áâà98,4áâà99,4áâà100,4áâà101
7700000000313070013
4áâà102,4áâà103,4áâà104,4áâà105
7700000000313070014
4áâà106,4áâà107,4áâà108,4áâà109
7700000000313070015
4áâà116,4áâà117,4áâà118,4áâà119
7700000000313070016
4áâà120,4áâà121,4áâà122,4áâà123
7700000000313070017
4áâà124,4áâà125,4áâà126,4áâà127
7700000000313070018
4áâà128,4áâà129,4áâà130,4áâà131
7700000000313070019
4áâà132,4áâà133,4áâà134,4áâà135
7700000000313070020
4áâà136,4áâà137,4áâà140,4áâà141
7700000000313070021
4áâà142,4áâà145,4áâà146,4áâà147
7700000000313070022
4áâà148,4áâà149,4,5,6áâà1,6áâà2,6áâà3
7700000000313070023
6áâà5,6áâà6,6áâà7,6áâà10,6áâà11,6áâà13
7700000000313070024
6áâà14,6áâà18,6áâà19,6áâà21,6áâà22
7700000000313070025
6áâà24,6áâà26,6áâà4,7,7áâà2,7áâà3
7700000000313070026
7áâà4,7áâà5,7áâà8,7áâà9,7áâà13,7áâà14
7700000000313070027
7áâà15,7áâà16,7áâà20,7áâà21,7áâà1
7700000000313070028
7áâà2,7áâà3,7,7áâà1,7áâà2,7áâà3
7700000000313070029
7áâà4,7áâà5,9,9áâà1,9áâà2,9áâà3
7700000000313070030
9áâà4,9áâà5,9áâà6,9,9áâà1,9áâà2
7700000000313070031
9áâà3,9áâà4,9áâà5,9áâà6,9áâà7
7700000000313070032
9áâà8,9áâà9,9áâà1,10,13,13áâà1
7700000000313070033
7700000000313070034
13áâà7,13áâà8,13áâà9,14,14áâà2,14áâà3
7700000000313070035
16,16áâà1,16áâà2,16áâà3,16áâà4,16áâà5
7700000000313070036
16,16áâà1,16áâà2,16áâà3,16áâà4
7700000000313070037
16áâà5,18,18áâà1,18áâà2,18áâà3,18áâà4
7700000000313070038
18áâà5,18áâà6,18áâà7,18áâà8,18áâà9
7700000000313070039
18áâà10,18áâà11
7700000000313070040
15áâà1,21,21áâà1
7700000000400000001
áâà1,áâà2,2,3,4,5,5,6,8,9,9áâà1,10
7700000000600000001
73áâà3,73áâà4,73áâà6
7700000000700000001
121115
7700000001000000001
7700000001200000001
46,63
7700000001500000001
7700000002100000001
143411
3,7,14,18,29,30,30,31,31
7700000002141880001
40,41,42áâà1,42áâà6,42áâà14,42áâà15
7700000002200000001
42áâà16,43áâà1,44áâà1,44áâà2,45,45áâà1
7700000002200000002
7700000002200000003
1áâà1,1áâà2
7700000002500000001
7,8,9,10,11
7700000002519040001
2,2áâà2,3,5,7,7áâà2,8,9,9,11,11,13
7700000002526900001
13ª2,15,15,24áâà1,26,28,30,30áâà1
7700000002526900002
2,4,5,6,7,8,9,11,13,15,15ª1,17,19
7700000002542850001
7700000002600000001
1áâà1,2áâà1,2áâà2,3áâà1,3áâà2,8áâà1
7700000002800000001
10áâà1,10áâà2,12áâà1,12áâà2,12áâà3
7700000002800000002
12áâà10,13áâà1,13áâà2,13áâà3,13áâà4
7700000002800000003
13áâà5,16áâà1,16áâà2,16_16áâà1
7700000002800000004
16_16áâà2,32áâà1,32áâà2,33áâà1,36áâà1
7700000002800000005
36áâà2,37áâà1,37áâà2,42áâà1,47áâà1
7700000002800000006
52áâà1,52áâà2,52áâà3,53áâà1,54áâà1
7700000002800000007
57áâà1,59áâà1,61áâà1,68áâà1,68
7700000002800000008
69áâà1,70áâà1,74áâà1,75áâà1,75áâà2
7700000002800000009
76áâà1,76áâà8,78áâà1,78áâà8,78áâà9
7700000002800000010
78áâà10,80áâà1,81áâà1,82áâà1,83áâà1
7700000002800000011
84áâà1,85_85áâà1,85_85áâà2,86áâà1
7700000002800000012
87áâà1,97áâà1,97áâà6,97áâà9,98
7700000002800000013
7700000003200000001
1,3,4áâà1,5áâà1,5áâà2,6,8,9,10
7700000003310220001
11áâà1,12,14,16,18,20,22,24,26,28,30/1
7700000003310220002
32/8áâà1,36
7700000003310220003
1,2,3,4,5,11,13/2,15,16,17,18,23/5
7700000003312380001
2áâà1,2áâà2,2áâà3,2,4,6,6,8,10,12
7700000003312810001
16,18,20áâà1,20,22,23,24,24áâà6
7700000003312810002
26áâà1,26áâà2,28,30,32,34,36áâà1
7700000003312810003
36áâà6,38áâà1,38áâà5,38áâà8,40,40,42
7700000003312810004
44,46,48
7700000003312810005
1,4,5,6,7,8áâà1,8áâà2,8áâà7,9,10,11,12
7700000003316830001
13,13,14,15,15,16,17,17,17,19
7700000003316830002
19áâà9,20,21,21áâà1,22,23,25,26
7700000003316830003
27áâà2,28,29,30,31,32,32,33,33,34,35
7700000003316830004
36,37,37áâà5,38,39áâà1,39áâà6,40
7700000003316830005
41áâà1,41áâà4,41áâà9,41áâà12,41áâà13
7700000003316830006
42áâà8,42áâà1,42áâà2,43,43áâà2,44
7700000003316830007
45áâà3,45áâà9,45áâà2,46,47,48áâà1
7700000003316830008
48áâà2,49,50,51,51áâà1,51áâà2,51áâà3
7700000003316830009
52,54,54áâà4,56,56,58,60,60áâà2,62
7700000003316830010
64áâà1,64áâà2,66áâà1,68,70,72,73áâà3
7700000003316830011
73áâà4,73áâà5,76,80/2
7700000003316830012
2,9/34
7700000003317000001
1áâà1,1,1,1,2,3áâà1,4,5,6,7,8,9,10
7700000003321170001
11,12,13,14,15,16,18,19,20áâà1,21,22
7700000003321170002
23,24,25,26,28,29,30áâà1,31,32,33,34
7700000003321170003
7700000003321170004
1,3,5,7áâà1,7áâà2,8,8áâà2,8áâà3,9,10
7700000003321460001
10áâà2,10áâà3,11,13,15,17,19,21
7700000003321460002
1,2/1,3,3áâà6,4,5,6,8,10
7700000003322430001
1,2,3,4,5,6áâà1,7,8áâà1,9,10,11,12,13
7700000003330740001
14,14áâà2,15áâà1,15áâà2,16,16áâà2,17
7700000003330740002
18áâà1,18áâà2,19áâà1,19áâà2,20áâà1
7700000003330740003
20áâà2,20áâà8,21,22,23áâà1,24,25,27
7700000003330740004
22,31áâà1
7700000003331070001
1,2áâà1,2áâà2,3,3áâà1,4,5,6,7,8áâà1
7700000003331070002
8áâà2,9,10,11,11,12,13,13,14,15,16
7700000003331070003
17,18,19,20,20,21,22,23,24,25,26,27
7700000003331070004
28,29,30áâà1,32,33,34,35,36,38,39,40
7700000003331070005
41,42,43,44,45,46,47,48,49,51,51áâà2
7700000003331070006
55áâà1,57,59,61,63,63áâà2,67,69,71áâà1
7700000003331070007
1áâà1,1,2,2áâà1,2áâà2,3,4,5,6,7,8,9
7700000003331130001
10,11,12,13,13áâà1,14,15,16,17,18,19
7700000003331130002
20áâà1,20áâà2,21,22,23,24áâà1,25áâà2
7700000003331130003
26,27,28,29áâà1,29áâà1,30áâà1,31,32
7700000003331130004
33,34,35,36áâà1,36áâà2,37,38,39,40,41
7700000003331130005
42,43,44,45,46,47,48,49,50áâà1,52,53
7700000003331130006
54,55,56,57,58,60,62,64
7700000003331130007
3,4áâà1,5,5,6,10,12,13,14,15,16,17,18
7700000003339020001
19,20,21
7700000003339020002
1,2,3áâà1,5,7,9,13,15áâà1,15áâà2,17
7700000003339060001
19áâà1,19áâà2,21áâà1,23,25,27,29áâà1
7700000003339060002
1,3áâà1,4,4,5,6áâà1,6áâà1,6áâà2,8
7700000003339180001
8,10,11,12/38,13,14,15,16,17,18áâà1
7700000003339180002
19,20,21/13,22,22áâà2,24áâà2,26áâà1
7700000003339180003
28/9,30,32,34,36,42
7700000003339180004
1,2,3,4,5,6,7,8,9,10,11,12,13,14
7700000003339200001
15áâà1,16,17,18,19,20áâà1,20áâà2,21,22
7700000003339200002
23áâà1,24,26,28,30,32
7700000003339200003
1,2,3,4,6,7áâà1,7áâà4,8áâà1,8áâà2,9
7700000003339260001
10áâà2,13,14,15,16,16,17áâà1,18
7700000003339260002
19áâà1,20,21,22,23áâà1,23áâà2,24áâà1
7700000003339260003
24áâà7,25,26,28áâà1,28áâà2,29,31,32,33
7700000003339260004
34,36,37,38,39,40,41,42,43,44,44áâà4
7700000003339260005
45,46,47áâà1,47áâà2,48,49,50,51áâà1,52
7700000003339260006
53,53,53áâà1,54,54,55,56áâà1,56áâà6
7700000003339260007
57áâà1,57áâà2,58,59,60,61,62,64,65,66
7700000003339260008
67,68,69,70,72,74
7700000003339260009
1,2,3,4,5,6,7,7áâà2,8,9,10,11,12,13,14
7700000003341800001
15,16,17,18,19,20,21,22,23áâà1,24,25
7700000003341800002
26,27,28,28áâà2,29áâà1,29áâà2,30,31,32
7700000003341800003
1,1,2,3,3,4,5,6,7,8,8,8,9,10áâà1
7700000003342010001
12,14,15,16,18,19áâà1,20,21,22,23,24
7700000003342010002
25,26áâà1,26áâà2,27,28áâà2,28áâà3
7700000003342010003
28áâà4,29,30,31,32,33,34,35,36,37,38
7700000003342010004
39,39,40áâà1,41,42,42,42,44,46,47
7700000003342010005
48,48,49,50,51,52,53,54,55,56,56áâà1
7700000003342010006
56áâà3,57,59,59áâà1,59áâà3,61,63,65
7700000003342010007
65áâà1,65áâà2,67,69áâà1,71,73,75áâà1
7700000003342010008
7700000003400000001
1,2áâà1,2áâà2,3,4,4áâà8,5,6/13,7/15
7700000003730010001
7/15áâà2,7/15áâà3,8/18,9/20,10
7700000003730010002
11_11áâà1,12áâà1,12áâà2,12áâà3,13
7700000003730010003
13áâà1,14,14áâà2,15,16áâà1,16áâà2,17
7700000003730010004
17,17áâà2,18,19áâà1,19áâà2,19áâà4
7700000003730010005
20/25áâà2,20/25áâà3,20/25áâà4,21áâà1
7700000003730010006
30áâà1,30áâà2,30áâà3,30áâà4,31,31áâà2
7700000003730010007
32,33,33áâà2,34áâà1,34áâà2,34áâà3
7700000003730010008
21áâà2,23,24,25/27,26áâà1,27/28,28
7700000003730010009
41áâà1,41áâà3,42,43,44,45/13
7700000003730010010
46_46áâà1,47/18,49áâà1,49áâà3,51
7700000003730010011
53áâà1,53áâà9,55áâà1,55
7700000003730010012
7700000004300000001
1,2áâà1,3áâà1,3áâà15,3áâà19,3,4,5,6,7
7700000004400010001
8,9,10áâà2,11,12,12áâà5,13,14,14,16
7700000004400010002
18,19,21,22,25,25,26,26,27,28,28,30
7700000004400010003
31,32,33áâà1,34áâà1,34áâà2,34áâà7,34
7700000004400010004
35,36,36áâà1,37áâà1,37áâà8,38,38,39
7700000004400010005
40,41,41áâà2,41áâà3,41,42,43áâà1
7700000004400010006
43áâà2,44,45,46,47áâà1,48,48áâà1,51
7700000004400010007
52,53,54,55,56,58,60,60
7700000004400010008
1áâà26,1áâà27,1áâà29,1áâà30,2áâà1
7700000004400020001
7700000004400020002
1áâà7,1áâà9,1áâà10,1áâà10,1áâà11
7700000004400020003
1áâà12,1áâà14,1áâà16,1áâà17,1áâà19
7700000004400020004
1áâà20,1áâà22,1áâà23,1áâà24,1áâà25
7700000004400020005
2áâà2,2áâà3,2áâà4,2áâà5,2áâà6,2áâà7
7700000004400020006
2áâà8,2áâà9,2áâà10,2áâà11,2áâà12,3áâà1
7700000004400020007
3áâà2,3áâà3,7,11,13,14,14,14,15,16
7700000004400020008
18/1,18,20,21,23,25,27,29,29áâà1,41
7700000004400020009
56,56áâà2,56áâà3,56áâà8,70,72,74
7700000004400020010
76áâà1,78
7700000004400020011
áâà1,áâà3,áâà4,áâà5,áâà6,áâà7,áâà8
7700000004500000001
áâà9,áâà10,áâà11,áâà12,áâà22,áâà27
7700000004500000002
áâà30,áâà31,áâà32,áâà33,ª1,ª2,ª3,1,2
7700000004500000003
2áâà1,3,4,5,6,7,8,8áâà1,9,10,11,13,14
7700000004500000004
15,15,15áâà1,16,17,18,18,18áâà1,19
7700000004500000005
19áâà1,19áâà2,19áâà3,20,21,21áâà1
7700000004500000006
21áâà2,21áâà3,22,23,24,24áâà1,24
7700000004500000007
24áâà1,24áâà3,24áâà4,24áâà5
7700000004500000008
24áâà6,24áâà10,24áâà11,24áâà12,25
7700000004500000009
25áâà2,26,26,27,27áâà1,28,28áâà3,30
7700000004500000010
30,31,32áâà1,32áâà2,33,36,38,38áâà1
7700000004500000011
38áâà2,43,43,43áâà1,44
7700000004500000012
ª101,ª102,ª103,ª104,ª105,ª106,ª107
7700000200000000001
124305
45272585000
ª107,ª107,ª107áâà1,ª107,ª107áâà1
7700000200000000002
ª109,ª109,ª109áâà2,ª109áâà3
7700000200000000003
ª109áâà4,ª114áâà1,ª115,ª117,ª117áâà1
7700000200000000004
ª117áâà2,ª118,ª119,ª119áâà1,ª120,ª123
7700000200000000005
ª124áâà1,ª124áâà2,ª124áâà5,ª125
7700000200000000006
ª125áâà1,ª126,ª127,ª128,ª129,ª129áâà1
7700000200000000007
ª130,ª130,ª131,ª134áâà1,ª137,ª138
7700000200000000008
ª139,ª139áâà1,ª139áâà2,ª141,ª142,ª145
7700000200000000009
ª145áâà1,ª146,ª147,ª148,ª153,ª153áâà1
7700000200000000010
ª153,ª158,ª158áâà1,ª158,ª159,ª160
7700000200000000012
ª160áâà1,ª161,ª161,ª162,ª162áâà1
7700000200000000013
ª162áâà2,ª163,ª164,ª164áâà1,ª164,ª165
7700000200000000014
ª165áâà1,ª165áâà2,ª166,ª166,ª200
7700000200000000015
ª200,ª200áâà1,ª200,ª205,ª205,ª205
7700000200000000016
ª207,ª219,ª222,ª222,ª222áâà1,ª222
7700000200000000017
ª224,ª224áâà1,ª225áâà1,ª225áâà2,ª225
7700000200000000018
ª226,ª226áâà1,ª227,ª228,ª229,ª230,ª231
7700000200000000019
ª1648,ª1650,ª2001,ª2001áâà1,ª2003
7700000200000000020
124365
45272580000
ª2003áâà1,ª2003áâà2,ª2005,ª2005áâà1
7700000200000000021
ª248áâà1,ª248áâà2,ª250,ª251
7700000200000000022
ª1601,ª1602,ª1603,ª1604,ª1604áâà1
7700000200000000023
ª1605,ª1606,ª1607,ª1609,ª1611,ª1612
7700000200000000024
ª1613,ª1614,ª1615,ª1616,ª1619,ª1620
7700000200000000025
ª1620áâà1,ª1621,ª1621áâà2,ª1621,ª1622
7700000200000000026
ª1623,ª1624,ª1624,ª1625,ª1625,ª1626
7700000200000000027
ª1628,ª1630,ª1631,ª1632,ª1634áâà3
7700000200000000028
ª1634áâà12,ª1637áâà1,ª1638áâà1,ª1639
7700000200000000029
ª1640,ª1641,ª1642,ª1643,ª1645,ª1647
7700000200000000030
ª2005áâà2,ª2008,ª2008áâà1,ª2009,ª2010
7700000200000000031
ª1634áâà2,ª1637,ª1638,ª1640
7700000200000000032
ª232,ª233,ª234,ª234,ª235,ª236
7700000200000000033
ª236áâà1,ª236áâà2,ª237,ª237,ª238
7700000200000000034
ª238áâà1,ª238áâà2,ª239,ª239áâà1,ª240
7700000200000000035
ª241,ª247,ª247áâà1,ª247áâà2,ª248
7700000200000000036
ª1100,ª1101,ª1102,ª1102áâà1,ª1103
7700000200000000037
124460
45272591001
ª1104,ª1104áâà2,ª1104áâà3,ª1104áâà4
7700000200000000038
ª1104áâà5,ª1105,ª1106,ª1106áâà1
7700000200000000039
ª1106áâà2,ª1106,ª1107,ª1108,ª1109
7700000200000000040
ª1110,ª1111,ª1111,ª1112,ª1113,ª1114
7700000200000000041
ª1115,ª1116,ª1117,ª1117,ª1118
7700000200000000042
ª1118áâà1,ª1119,ª1121,ª1122,ª1123
7700000200000000043
ª1124,ª1125,ª1126,ª1127,ª1128,ª1129
7700000200000000044
ª1130,ª1131,ª1131áâà1,ª1131,ª1132
7700000200000000045
ª1133,ª1134,ª1135,ª1136,ª1136,ª1137
7700000200000000046
ª1138,ª1138áâà1,ª1140,ª1141,ª1142
7700000200000000047
ª301,ª301,ª302,ª302,ª302,ª303
7700000200000000048
ª1143,ª1145,ª1145áâà1,ª1145áâà2,ª1201
7700000200000000049
ª1201,ª1202,ª1203,ª1204,ª1204áâà1
7700000200000000050
ª317áâà3,ª317áâà5,ª317áâà6
7700000200000000053
ª1204áâà2,ª1204áâà3,ª1205,ª1206
7700000200000000051
ª1206áâà1,ª1206,ª1207,ª1208,ª1209
7700000200000000052
ª1209áâà1,ª1210,ª1210áâà1,ª1211,ª1212
7700000200000000054
ª1213,ª1214,ª1215,ª1217,ª1218
7700000200000000055
ª100,ª101áâà1,ª101áâà2
7700000200000000056
ª2043áâà2,ª2043áâà3,ª2045,ª2045áâà1
7700000200000000063
ª303áâà1,ª303áâà2,ª305,ª305áâà1,ª306
7700000200000000064
ª307,ª308,ª309,ª312,ª313,ª313
7700000200000000065
ª313áâà1,ª314,ª317áâà1,ª317áâà2
7700000200000000066
ª317áâà7,ª317áâà8,ª317áâà9,ª322
7700000200000000067
ª2010áâà1,ª2011,ª2011,ª2013,ª2014
7700000200000000057
ª2014áâà1,ª2015,ª2016,ª2016áâà1
7700000200000000058
ª2016áâà2,ª2018,ª2019,ª2019áâà1,ª2024
7700000200000000059
ª2024áâà1,ª2024áâà2,ª2024áâà3,ª2028
7700000200000000060
ª2028áâà1,ª2028áâà2,ª2030,ª2031,ª2033
7700000200000000061
ª2033áâà1,ª2034áâà1,ª2043,ª2043áâà1
7700000200000000062
ª322,ª322áâà1,ª322áâà2,ª328,ª329
7700000200000000068
ª330,ª331áâà1,ª331,ª333,ª334
7700000200000000069
ª200,ª401,ª402,ª403,ª403,ª403áâà2
7700000200000000080
124498
ª403áâà3,ª403áâà4,ª403áâà5
7700000200000000081
ª403áâà6,ª403áâà7,ª403áâà8
7700000200000000082
ª403áâà9,ª403áâà10,ª403áâà11
7700000200000000083
ª403áâà12,ª403áâà13,ª403áâà14,ª403
7700000200000000084
ª617,ª617áâà2,ª617áâà3,ª617áâà4
7700000200000000085
ª334áâà1,ª336,ª339,ª340,ª342áâà1
7700000200000000070
ª347,ª348áâà1,ª348áâà2,ª348,ª348
7700000200000000071
ª349áâà1,ª349áâà3,ª356,ª356áâà1,ª357
7700000200000000072
ª358,ª359,ª359áâà1,ª361,ª362,ª363
7700000200000000073
ª363áâà1,ª364,ª365,ª366,ª366áâà1
7700000200000000074
ª602,ª603,ª603,ª604,ª605,ª607,ª607
7700000200000000075
ª426áâà4,ª426áâà5,ª426áâà7,ª426
7700000200000000076
ª608,ª608áâà1,ª608,ª611áâà1,ª612
7700000200000000078
ª349,ª350,ª351,ª352,ª353,ª354,ª355
7700000200000000095
ª355,ª360,ª601,ª601,ª602,ª602áâà2
7700000200000000096
ª501,ª503,ª504áâà1,ª505áâà1,ª514
7700000200000000097
124536
ª514áâà1,ª514áâà2,ª514áâà3,ª514áâà4
7700000200000000098
ª445,ª446,ª447,ª448,ª448,ª448,ª449
7700000200000000077
ª449áâà1,ª450,ª451,ª452,ª452,ª453
7700000200000000099
ª453áâà1,ª453áâà2,ª454,ª455,ª456,ª456
7700000200000000100
ª457,ª458,ª469,ª469áâà1
7700000200000000101
ª801,ª801áâà1,ª802,ª802áâà1,ª802áâà2
7700000200000000102
124527
ª802,ª803,ª803áâà2,ª803,ª805áâà1
7700000200000000103
ª805áâà2,ª807,ª807,ª808,ª810,ª811
7700000200000000104
ª811áâà1,ª812,ª812,ª813,ª813áâà1
7700000200000000105
ª813,ª813áâà1,ª813áâà2,ª814
7700000200000000106
ª814áâà1,ª815,ª815áâà1,ª815,ª816,ª817
7700000200000000107
ª514,ª515,ª516,ª516,ª516,ª518
7700000200000000108
ª518áâà2,ª518,ª519,ª520,ª521,ª522
7700000200000000109
ª523,ª524,ª525,ª526,ª527,ª527áâà2,ª528
7700000200000000110
ª529,ª529,ª530,ª531,ª537,ª538
7700000200000000111
ª830áâà2,ª831,ª832,ª833,ª834
7700000200000000112
ª818,ª819,ª820,ª820áâà1,ª822,ª824
7700000200000000113
ª835áâà2,ª836,ª836áâà1,ª837,ª837,ª838
7700000200000000120
ª838áâà1,ª839,ª839áâà1,ª840,ª840áâà1
7700000200000000089
ª1007,ª1007áâà2,ª1011áâà1,ª1012,ª1013
7700000200000000121
ª826,ª826áâà1,ª826áâà2,ª826áâà3
7700000200000000122
ª826áâà4,ª827,ª828,ª828áâà1,ª828
7700000200000000123
ª828,ª829,ª829,ª830,ª830áâà1
7700000200000000124
ª834áâà1,ª834,ª834,ª835áâà1
7700000200000000125
ª612áâà1,ª613,ª613,ª616áâà2,ª617
7700000200000000079
ª618,ª618áâà1,ª618áâà2,ª618,ª620áâà1
7700000200000000086
ª707áâà1,ª708,ª709,ª710,ª710áâà2,ª711
7700000200000000087
ª338,ª338,ª339,ª339,ª341,ª342
7700000200000000088
ª343,ª344,ª344,ª345,ª346,ª347,ª348
7700000200000000090
ª701,ª702,ª703,ª704,ª705,ª706,ª707
7700000200000000132
ª1013áâà1,ª1013,ª1013,ª1013
7700000200000000133
ª1013áâà1,ª1014,ª1014,ª1015
7700000200000000134
áâà921,ª900,ª900áâà1,ª900áâà2,ª901
7700000200000000135
ª901áâà1,ª901áâà2,ª901,ª902,ª902áâà1
7700000200000000138
ª902,ª903,ª903,ª904,ª904,ª904,ª905
7700000200000000139
ª906,ª907,ª907,ª907,ª908,ª908áâà2
7700000200000000140
ª908áâà3,ª908áâà4,ª909,ª910,ª910áâà1
7700000200000000143
ª911,ª911áâà1,ª912,ª913,ª913áâà1,ª913
7700000200000000145
ª913,ª914,ª915,ª915áâà1,ª916,ª917
7700000200000000146
ª917,ª918,ª919,ª919áâà1,ª919,ª920
7700000200000000147
ª920áâà1,ª920,ª921,ª921,ª922,ª922
7700000200000000148
ª922,ª923,ª923áâà1,ª924,ª925,ª926
7700000200000000149
ª927,ª927áâà1,ª928,ª929,ª929,ª930
7700000200000000150
ª931,ª931áâà1,ª933
7700000200000000151
ª1001,ª1001,ª1002,ª1003,ª1003,ª1004
7700000200000000152
ª411,ª414,ª414áâà1,ª415,ª416,ª416áâà1
7700000200000000153
ª416,ª417,ª418,ª418áâà1,ª418áâà2,ª419
7700000200000000154
ª419áâà1,ª419,ª421,ª422,ª423,ª424
7700000200000000155
ª424,ª424,ª424,ª425,ª425,ª425áâà1
7700000200000000156
ª1401,ª1402,ª1403,ª1403,ª1405,ª1406
7700000200000000114
124617
ª1407,ª1408,ª1409,ª1410,ª1411,ª1412
7700000200000000115
ª1413,ª1414,ª1415,ª1416,ª1417,ª1418
7700000200000000116
ª1419,ª1420,ª1420áâà1,ª1422,ª1423
7700000200000000091
ª1424,ª1425,ª1426,ª1427,ª1428,ª1429
7700000200000000092
ª1430,ª1431,ª1432,ª1434,ª1435,ª1436
7700000200000000093
ª1437,ª1438,ª1440,ª1441,ª1443,ª1444
7700000200000000094
ª1445,ª1445áâà1,ª1446,ª1446áâà1
7700000200000000117
ª1446áâà5,ª1448,ª1448áâà1,ª1449,ª1450
7700000200000000118
ª1451,ª1452,ª1453,ª1454,ª1455,ª1456
7700000200000000119
ª1457,ª1458,ª1459,ª1460áâà2,ª1461
7700000200000000126
ª1462,ª1462áâà1,ª1463,ª1464,ª1465
7700000200000000127
ª1466,ª1467,ª1468,ª1469,ª1469,ª1471
7700000200000000128
ª1471
7700000200000000129
ª1446áâà8,ª1460,ª1460áâà1
7700000200000000164
ª1801,ª1801,ª1801áâà1,ª1801,ª1802
7700000200000000165
ª843áâà1,ª843áâà2,ª844,ª844áâà1
7700000200000000166
ª847áâà1,ª852,ª854,ª855,ª855áâà1,ª856
7700000200000000167
ª856áâà1,ª857,ª860,ª861,ª862,ª864
7700000200000000168
ª404,ª405,ª405áâà3,ª405,ª406,ª407
7700000200000000141
ª407áâà1,ª407áâà2,ª409,ª410,ª410áâà1
7700000200000000142
ª864áâà1
7700000200000000169
ª1015áâà1,ª1016,ª1017
7700000200000000170
ª1501,ª1501áâà1,ª1502,ª1502áâà1,ª1503
7700000200000000171
124683
ª1504,ª1504áâà1,ª1505,ª1506,ª1507
7700000200000000172
ª1509,ª1510,ª1511,ª1512,ª1512áâà2
7700000200000000173
ª1513áâà1,ª1513áâà2,ª1514,ª1515,ª1517
7700000200000000174
ª1518,ª1519,ª1520,ª1521,ª1522,ª1524
7700000200000000175
ª1528,ª1529,ª1530,ª1531,ª1532,ª1533
7700000200000000176
ª1534,ª1535,ª1537,ª1537áâà1,ª1537áâà2
7700000200000000177
ª1537áâà3,ª1537áâà4,ª1538,ª1539,ª1540
7700000200000000136
ª1541,ª1542,ª1543,ª1544,ª1545,ª1546
7700000200000000137
ª1546,ª1547,ª1548,ª1549,ª1550
7700000200000000178
ª1550áâà1,ª1551,ª1552,ª1553,ª1554
7700000200000000179
ª1555,ª1556,ª1557,ª1559,ª1560,ª1561
7700000200000000180
ª1561,ª1562,ª1563,ª1565,ª1627,ª1629
7700000200000000181
ª1649
7700000200000000011
ª1546áâà1
7700000200000000144
1,1,2,2,3,6,6áâà1,6,6áâà1,6áâà2
7700000200008450001
7,8,8áâà1,8,8áâà1,9,9áâà1
7700000200008450003
7700000200008450002
2,3,4,7,9áâà,11,13,15,17,18,31
7700000200010420001
11,11,11
7700000200010900001
1,1,1áâà1,1áâà2,1áâà3,1áâà4
7700000200012970001
1áâà5,1áâà6,1áâà8,1áâà9,2,3,4,4,6
7700000200012970002
6,8,10,10áâà1,12,12,13áâà1,13áâà2
7700000200012970003
7700000200012970004
13áâà8,13áâà9,14,14áâà1,14,14
7700000200012970005
14áâà1,14,15,16,16,16,17,18áâà1
7700000200012970006
18áâà2,18áâà4,18áâà5,18áâà7,18áâà8
7700000200012970007
18áâà9,18áâà10,18áâà11,18áâà12,20
7700000200012970008
21áâà1,21áâà2,21áâà3,21áâà3
7700000200012970009
21áâà4,21áâà5,21áâà6,21áâà7
7700000200012970010
21áâà8,21áâà9,21áâà10,21áâà11
7700000200012970011
21áâà12,21áâà13,21áâà14,21áâà15
7700000200012970012
21áâà16,21áâà17,21áâà18,21áâà19,24
7700000200012970013
7700000200012970014
25áâà8,25áâà9,26áâà1,27áâà1,27áâà2
7700000200012970015
27áâà3,28áâà1,28áâà2,28áâà3,28áâà4
7700000200012970016
28áâà5,29áâà1,29áâà2,29áâà3,30áâà1
7700000200012970017
7700000200012970018
31áâà1,31áâà2,31áâà3,34áâà1,34áâà2
7700000200012970019
34áâà3,34áâà4,34áâà5,36áâà1,36áâà2
7700000200012970020
36áâà3,38áâà1,38áâà2,38áâà3
7700000200012970021
1,3,4,6,7,8,9,10,11,12,14,16,18,20,22
7700000200012980001
2,4,6,8,10,10áâà2,17,26
7700000200013000001
4,5,6,7áâà1,7áâà2,7áâà3,7áâà5,7,8áâà1
7700000200013080001
8áâà2,8áâà3,9,9áâà1,10,10áâà1,10áâà2
7700000200013080002
10,11áâà1,11áâà2,11áâà3,11áâà4,11áâà5
7700000200013080003
7700000200013080004
7700000200013080005
12áâà6,12áâà6,12áâà7,12áâà7,12áâà8
7700000200013080006
12áâà9,12áâà10,12áâà11,12áâà12,13,14áâà1
7700000200013080007
7700000200013080008
1áâà1,1áâà2,1áâà3,3
7700000200013080009
2,2áâà2,2áâà3,2áâà4,2,2áâà3,2áâà4
7700000200013090001
2áâà5,2áâà6,2áâà7,4áâà1,4áâà2,4áâà3
7700000200013090002
7700000200013090003
4áâà10,4áâà11,4áâà12,4áâà13,6áâà1
7700000200013090004
6áâà2,6áâà3,8áâà1,8áâà2,8áâà3,8áâà4
7700000200013090005
8áâà5,8áâà6,8áâà7
7700000200013090006
7700000200013090007
7700000200013090008
7700000200013090009
1áâà18,1áâà19,1áâà23,1áâà26,1áâà27
7700000200013090010
1áâà29,1áâà30,1áâà31,1áâà33,1áâà34
7700000200013090011
1áâà35,1,1áâà1,1áâà2,3áâà1,3áâà2
7700000200013090012
3áâà6,3áâà9,3áâà10,3áâà11,3áâà1
7700000200013090013
3áâà2,3áâà3,5áâà1,5áâà2,5áâà3,5áâà4
7700000200013090014
7700000200013090015
5áâà11,7áâà2,9áâà1,9áâà2,9áâà3,9áâà4
7700000200013090016
7700000200013090017
7700000200013090018
7700000200013090019
7700000200013090020
12áâà1,12áâà2,12áâà5,12áâà6
7700000200013100001
áâà1,áâà2,áâà3,áâà4,áâà4,áâà5,áâà6
7700000200013100002
áâà7,áâà8,áâà9,áâà10,áâà11,2áâà1,2áâà2
7700000200013100003
2áâà3,2áâà4,2áâà5,2áâà8,2áâà9,2áâà11,4
7700000200013100004
7700000200013100005
11áâà4,11áâà4,11áâà5,11áâà6,11áâà7
7700000200013100006
7700000200013100007
11áâà13,13áâà1,13áâà2,13áâà4,15áâà1
7700000200013100008
15áâà2,15áâà5,15áâà6,17áâà1,17áâà2
7700000200013100009
17áâà4,17áâà5,17áâà6,17áâà7
7700000200013100010
1áâà1,1áâà2,1áâà3,3,3ª3,3áâà1,3áâà2
7700000200013100011
3áâà3,3áâà4,5áâà1,5áâà2,5áâà3,5áâà4
7700000200013100012
5áâà5,5áâà6,7áâà1,7áâà2,7áâà3
7700000200013100013
7700000200013110001
2áâà8,6áâà1,8áâà1,8áâà2,8áâà3,8áâà4
7700000200013110002
7700000200013110003
8áâà11,8áâà12,8áâà13,8áâà14,8áâà15
7700000200013110004
8áâà16,8áâà17,10,12áâà1,12áâà4,14áâà1
7700000200013110005
2,4,7,10,11,12,12,13,14,15,16,17,18
7700000200013160001
20,21,22áâà,23,25,28,29,30
7700000200013160002
8,10,12,14,18,20,22,22,26,28,30,33
7700000200013320001
34,34,35,38,40,40,41,42,42,43,56
7700000200013320002
60,62,64,67
7700000200013320003
7700000200015110001
1,2,2,3,4,5,6,7,8,9,10,12,14,16
7700000200015230001
áâà1,1áâà1,1áâà2,1áâà3,1áâà4,2,6,6
7700000200016210001
7700000200016840001
1,15,19,48,48áâà2,48áâà3,48áâà4
7700000200017820001
48áâà5,48áâà7,49áâà1,49áâà2,49áâà3
7700000200017820002
49áâà4,49áâà5,49áâà6,49áâà7,49áâà8
7700000200017820003
49áâà9,49áâà10,49áâà11,49áâà12,49áâà13
7700000200017820004
1áâà1,1áâà1,1áâà2,2,3,4,6,7,8,9,10
7700000200018300001
10,11,13,14,15,16,17,18,19,20,21,22
7700000200018300002
23,24,25,26,27,28,29,30,30áâà3,30,31
7700000200018300003
7700000200018300004
7700000200020100001
7700000200020100002
7,8,9,10,11,12,12,13,15,16,16,17
7700000200020990001
17áâà5,17áâà1,17áâà2,17áâà3,17áâà4
7700000200020990002
7700000200020990003
2,4,4áâà1,6,8
7700000200021100001
7700000200021100003
7700000200021100002
7700000200022030001
13áâà1,15,15,21áâà13,21áâà15,21áâà20
7700000200022030002
21áâà24,28,28áâà1,28áâà3,28ª1
7700000200022030003
28áâà1,28áâà3,28,30,32,34
7700000200022030004
7700000200022050001
áâà1,áâà2,áâà3,1,1áâà1,3áâà1,3áâà2
7700000200022050002
3áâà3,3áâà4,5,7,18áâà1,18áâà2,18áâà3
7700000200022050003
1áâà2
7700000200022050005
áâà4,áâà5,áâà6,áâà7,áâà8,áâà9,2,2
7700000200022050006
8áâà9,8áâà10,8áâà11,8áâà12,8áâà14
7700000200022050007
7700000200022050008
8áâà15,8áâà16,8áâà17,8áâà18,10,10áâà1
7700000200022050009
10áâà2,10áâà3,10áâà4,10áâà5,10áâà7,16
7700000200022050010
16áâà1,18áâà4,18áâà5,18áâà6,18áâà9
7700000200022050011
ª1101,17,20áâà1,20áâà2,22,24,40,42,44
7700000200022050012
1,2,3,3áâà1,4,5,7
7700000200022370001
1,2,2áâà2,3,4,5,6,7,8,9,10,11,12,13
7700000200023950001
14,15,15ª,16,17,18,19,19,20,21,70
7700000200023950002
7700000200023960001
7700000200024370001
3áâà7,3áâà8,4ª,11áâà1,11áâà2,11áâà3
7700000200024370002
11áâà4,11áâà5,11áâà6,23áâà1,23áâà2
7700000200024370003
23áâà3,23áâà4,23áâà5,23áâà8,23áâà9
7700000200024370004
23áâà11,23áâà12
7700000200024370005
7700000200024400001
1,1,1,2,2,2,3,4áâà2,5,7,8,10,10
7700000200024760001
3,5,7,9,11,13,15,17,19,21,23,25,27,50
7700000200025430001
2,3,3,4,6
7700000200026920001
1áâà1,1áâà2,1áâà4,1áâà5,1áâà6,2,2áâà1
7700000200027140001
2áâà2,2áâà3,2áâà1,3,4áâà1,4áâà2,4áâà3
7700000200027140002
5áâà1,5áâà2,6áâà1,6áâà2,6áâà3,6áâà4
7700000200027140003
7700000200027140004
7700000200027140005
7700000200027140006
6áâà21,6áâà22,6áâà23,6áâà24,6áâà25,8,9
7700000200027140007
10áâà1,10áâà2,10áâà3,11áâà1,11áâà2
7700000200027140008
11áâà3,11áâà4,12áâà1,12áâà2,12áâà3
7700000200027140009
12áâà4,12áâà5,12áâà6,12áâà7,15
7700000200027140010
12áâà4,12áâà5,12áâà6,12áâà7
7700000200027290001
7700000200027290002
7700000200030670001
7700000200031970001
3áâà1,3áâà2,3áâà3,5,6,7,77,9,11,13
7700000200031980001
13áâà1,15
7700000200031980002
7700000200039270001
15,27,58,73,74,77,82,90,105
7700000200041680001
áâà7,áâà8,áâà9,áâà10,áâà11,1
7700000200041710001
1áâà1,1áâà2,1áâà3,1áâà4,3,3áâà1
7700000200042940001
4,4áâà1,6,12
7700000200042970001
7700000200043000001
3áâà1,3áâà2,5,6,6áâà1,6áâà2,6áâà3
7700000200045220001
1,2áâà1,2áâà2,2áâà3,3áâà1,3áâà2,4áâà1
7700000200045230001
4áâà2,5
7700000200045230002
1áâà1,1áâà2,1áâà3,1áâà6,1áâà7,2,2áâà2
7700000200045240001
2áâà3,2áâà4,2áâà5,2áâà13,2áâà14,2áâà20
7700000200045240002
2áâà21,3áâà1,3áâà2,3áâà3,3áâà4,3áâà4
7700000200045240003
3áâà5,3áâà5,3áâà6,3áâà7,3áâà8,3áâà9
7700000200045240004
3áâà10,3áâà10,3áâà11,3áâà12,3áâà13
7700000200045240005
3áâà14,3áâà15,3áâà17,5áâà1,5áâà2,5áâà3
7700000200045240006
5áâà4,6,7áâà1,7áâà2,7áâà3,7áâà4,8
7700000200045240007
1áâà1,2,3áâà1,3áâà2,3áâà1,3áâà2
7700000200045280001
5áâà1,5áâà2,6,7áâà1,7áâà2,7áâà3,7áâà4
7700000200045280002
7700000200045280003
7700000200045280004
áâà2,áâà10,áâà11,2áâà1,2áâà2,2áâà3
7700000200045290001
7700000200045290002
2áâà10,2áâà11,2áâà12,2áâà13,3áâà1
7700000200045290003
7700000200045290004
4áâà7,4áâà8,4áâà9
7700000200045290005
7700000200045330001
1áâà1,1áâà2,2áâà1,2áâà2,2áâà6,3
7700000200045330002
24áâà,26áâà,26áâà1,26áâà2,26áâà3
7700000200045360001
28,30,33,35áâà,35áâà1,35áâà2
7700000200045360002
35áâà3,37,37áâà,37áâà1,37áâà2,39
7700000200045360003
41,43,43
7700000200045360004
1áâà1,3,4áâà1,4áâà2,4áâà3,4áâà4,4áâà5
7700000200045370001
4áâà6,4áâà7,4áâà8,4áâà9,5áâà1,5áâà2
7700000200045370002
7700000200045370003
7700000200045370004
5áâà15,5áâà15,5áâà16,5áâà17,5áâà17
7700000200045370005
5áâà19,5áâà20,5áâà21,5áâà22,5áâà23,6
7700000200045370006
7áâà1,10,10áâà1
7700000200045370007
áâà1649,1,1áâà1
7700000200045380001
1,2,2áâà1,2áâà1,2áâà2,3áâà1,4áâà1
7700000200045390001
7700000200045390002
4áâà8,15,15áâà2
7700000200045390003
3áâà8,4áâà1,4áâà6,15áâà1,15áâà2,21
7700000200045400001
2áâà1,3áâà5
7700000200045410001
4,12
7700000200045420001
1,3,3,23,24,28,48,53,55,55áâà1,55
7700000200200000001
59,65,69
7700000200200000002
1,2,3,4,5,6,6,10,11,12,13,13,14,15
7700000200300000001
7700000200416990001
17,18,19,20,21,21,22,23,24
7700000200416990002
1,3,5,7,11,13,15,17,19,19,23,25,27,29
7700000200431520001
31,31,33,35,40,41,42,43,44,45,46
7700000200431520002
7700000200516980001
7700000200516980002
3,4áâà2,4áâà4,6,6ª1,8,8áâà2,10_16,13
7700000200516980004
13_15áâà2,13_15áâà3,13_15áâà4,18
7700000200516980005
7700000200516980006
20áâà8,20áâà9,22/24áâà5,27áâà2,27áâà3
7700000200516980007
7700000200516980008
28áâà1,28áâà3,28áâà4,28áâà5,28áâà8,30
7700000200516980009
37áâà3,39,41,43,45,45áâà2,45áâà2
7700000200516980010
45áâà10,53áâà1,55áâà1,55áâà3,55áâà4
7700000200516980011
55áâà5,57áâà1,57áâà2,57áâà4,57áâà5
7700000200516980012
59áâà1,59áâà2,59áâà3,59áâà4,61áâà1
7700000200516980013
61áâà2,61áâà4,63áâà1,63/43áâà2
7700000200516980014
80áâà10,91
7700000200521140001
7700000200521140002
22,24,30
7700000200531510001
59,71,72,74,75,77,79,81,83,87,89,89
7700000200600000001
91,97,101,103,104,108,110áâà1,110áâà2
7700000200600000002
7,34,44,44ª2
5500000100012680001
5500000100012680002
5500000100013700001
5500000100013700002
(2-38),(1-51)
5500000100013730001
5500000100013730002
3,5,9,11,21
1100000700000040001
169711
1106
87423000000
1100000700000040002
169712
(4-14),24
1100000700000060001
169710
1100000700000060002
3-18,(22-28)
1100000700000110001
20,(19-29),35
1100000700000110002
10,31,33,35,37,41,43,45
1100000700000120001
36,40,42,46,50,52
1100000700000120002
1100000700000140001
(1-11),(15-19)
1100000700000140002
7200000100002400001
71401368002
7200100002700000001
625505
7224
71244830003
7200100002700000002
7200100002700000003
7200100002700000004
7200100004900000001
625509
71244856001
7200100004900000002
7200100004900000003
7200100004900000004
7200100004900000005
7200100004900000006
7200100004900000007
7200100004900000008
7200100004900000009
7200100000200000001
625516
71244805001
7200100000200000002
7200100000200000003
7200100000200000004
7200100000200000005
7200100000200000006
7200100000200000007
7200100004900000010
7200100004900000011
7200100002700000005
7200100002700000006
7200100002700000007
7200100002700000008
7200100002700000009
7200100002700000010
7200100002700000011
7200100002700000012
7200100002700000013
7200100004900000012
7200100004900000013
7200100004900000014
7200100004900000015
7200100004900000016
7200100004900000017
7200100004900000018
7200100004900000019
7200100004900000020
7200100004900000021
7200100004900000022
7200100004900000023
7200100004900000024
7200100004900000025
7200100004900000026
7200100004900000027
7200100004900000028
7200100004900000029
7200100004900000030
7200100004900000031
69 /3
7200000100000930005
69 
7200000100000930004
7200000100002140004
7200000100002450015
7200000100002830008
7200000100002830009
185
7200000100003810003
7200000100003640005
84,86
7200000100004080003
7200000100001080013
7200000100001040004
7200000100007350001
7200000100005040005
7200000100002130003
36,90
7200000100005330006
7200000100008700001
7200000100004630006
7200000100003080020
128
7200000100003080021
7200000100003080022
163,165
7200000100003080023
625053
7200000103000050001
7200000100500150001
625033
7200000100500170001
7200000100500160001
7200000100500180001
7200000100800400001
7200000102800020001
28,30,32,34,36,37,39,26,35,33,22,20,18
5100600000100200001
184702
5102
5111
47220551000
20,18,16,14,12,10,6,28,26,24,22,1,3,5,7
5100600000100040001
37,43
5100600000100040002
184703
3,5,7,9,11,13,17,19,21,23,29,25
5100600000100200002
59
2400500000100110004
2400001800000040006
3802700002500000001
666024
25255808009
3802700002600000001
25255808010
3802700002300000001
25255808005
5001900100003010001
5001900100003010002
5002200001500000001
46241804001
5002200004100000001
143033
46241813001
5002200004200000001
143032
46241861003
5002200006200000001
46241557000
5002200011500000001
46241852003
2200000100009460001
48-77
2200000100009460002
(2-18),(1-43)
2200000700000020001
658700
01410000000
(20-140),43,(45-177)
2200000700000020002
658705
(2-62),(1-45)
2200000700000030001
(64-198),(47-197)
2200000700000030002
(20-100),(7-101)
2200000700000040001
(2-18),(1-5)
2200000700000040002
658706
2200000700000050001
(2-20),(29-47)
2200000700000050002
(10-100),(11-93)
2200000700000110001
(102-262)
2200000700000110002
658703
(95-275)
2200000700000110003
658707
2200000700000110004
658701
2200000700000140001
(69-123)
2200000700000140002
2200000700000140003
(40-106)
2200000700000140004
2200000700000160001
(66-156),(53-131)
2200000700000160002
(2-128),(1-103)
2200000700000170001
(130-294),(105-313)
2200000700000170002
(2-72),(1-61)
2200000700000190001
2200000700000190002
2200000700000190003
658709
(74-160)
2200000700000190004
2200000700000090001
(48-80),(49-89)
2200000700000090002
(2-8),(1-21)
2200000700000330001
2200000700000330002
2200000700000280001
(22-132),(31-175)
2200000700000280002
(2-4),(1-15)
2200000700000270001
(6-146),(17-153)
2200000700000270002
2200000700000340001
(18-100),(19-99)
2200000700000340002
2200000700000630001
(48-100),(49-99)
2200000700000630002
(2-110),(1-103)
2200000700000420001
(112-168),(105-109)
2200000700000420002
(2-72),(1-77)
2200000700000400001
(74-114),(79-117)
2200000700000400002
(2-80),(1-75)
2200000700000620001
(82-220),(77-161)
2200000700000620002
(2-176),(1-155)
2200000700000440001
(178-360),(157-343)
2200000700000440002
(2-82),(1-71)
2200000700000480001
(84-86)
2200000700000480002
(2-130),(1-105)
2200000700000690001
(132-326),(107-215)
2200000700000690002
(2-68),(1-47)
2200000700000710001
(70-122),(49-87)
2200000700000710002
(2-42),(1-23)
2200000700000840001
(44-76),(25-75)
2200000700000840002
(2-90),(1-85)
2200000700000850001
(92-256),(87-235)
2200000700000850002
(2-56),(1-41)
2200000700000890001
(58-124),(43-113)
2200000700000890002
(2-70),(1-71)
2200000700000960001
(72-142),(73-151)
2200000700000960002
(2-76),(1-47)
2200000700000940001
(78-134),(49-99)
2200000700000940002
(2-34),(1-37)
2200000700001070001
(36-122),(39-129)
2200000700001070002
(2-94),(1-113)
2200000700001000001
(96-218),(115-289)
2200000700001000002
2200000700001010001
2200000700001010002
(92-266),(95-293)
2200000700001010003
2200000700001030001
(30-90),(45-125)
2200000700001030002
(2-74),(1-71)
2200000700001160001
(76-112),(73-111)
2200000700001160002
(2-74),(1-89)
2200000700001170001
(76-112),(91-137)
2200000700001170002
2200000700001180001
(40-96),(45-103)
2200000700001180002
2200000700001240001
(62-92),(67-103)
2200000700001240002
2200000700001440001
(54-72),(59-75)
2200000700001440002
(2-86),(1-119)
2200000700001470001
(88-134),(121-157)
2200000700001470002
(2-96),(1-87)
2200000700001490001
(98-102),(89-107)
2200000700001490002
2200000700001570001
(36-68),(37-77)
2200000700001570002
(2-64),(1-59)
2200000700001630001
(66-230),(61-211)
2200000700001630002
(2-60),(1-97)
2200000700001650001
(62-114),(99-129)
2200000700001650002
(13-19),(2-26)
7400000100000010001
4200001500000670001
(40-80),(45-77)
4200001500000670002
(2-222),73,75
4200001500000790001
4200001500000790002
4,8,8,19-21,80
4200001500003610001
37,37,38,39,141-999
4200001500003610002
(1-5),(6-12)
4200001500001300001
(7-333),(14-222)
4200001500001300002
4200001500001400001
(5-12),14-50
4200001500001400002
4200001500001860001
(43-99),(34-68)
4200001500001860002
(2-48),(7-47)
4200001500002120001
(49-999),(50-888)
4200001500002120002
4200001500002430001
(49-83),(54-94)
4200001500002430002
4200001500002760001
(20-100),(1-99)
4200001500002760002
4200001500000420004
4200001500000160001
(21-111),(30-112)
4200001500000160002
4200001500000440001
4200001500000440002
(24-200),(25-199)
4200001500000440003
1,(6-18)
4200001500001070001
(15-55),(20-54)
4200001500001070002
(1-109),(2-86)
4200001500001020001
(88-100),(111-125)
4200001500001020002
(102-150),(127-189)
4200001500001020003
4200001500001550001
2-111
4200001500001550002
4200001500002190001
(112-162),(107-167)
4200001500002190002
(169-999),(164-300)
4200001500002190003
(2-34),(7-23),71-83
4200001500002220001
(25-69)
4200001500002220002
4200001500002640001
(29-35),(18-80)
4200001500002640002
(91-999),(82-998)
4200300100000770002
652785
5902000015700000001
614514
57246851001
5902000002500000001
614505
57246864014
1,(2-24)
1800000100003250001
1800000100006060001
1800000100006060002
(60-120),(49-95)
2500000400001330002
692914
(8-26),(9-25)
2500000400001130004
2500000400001130005
2500000400001130006
(48-60),(51-59)
2500000400001130007
(32-44),(31-49)
2500000400001130008
35,39,47
2500000400001730003
(49-57),61,65
2500000400001730004
2500000400001730005
2500000400001920002
2500000400000560002
(9-23),(14-28)
2500000400000420002
0200000500000110007
3400000200001300001
404103
(2-22),(87-117)
3401500100000250003
3401500100000910003
(112-122)
3401500100000560004
(32-96),(27-81)
3401500100000910004
(1-17),(57-93),(2-22),(60-110)
3400400000100790001
403003
3403
18205551000
(19-55),(99-115),(24-58),(112-142)
3400400000100790002
403001
3400400001800320001
403020
18205556000
(29-91),(30-90)
3400400001800320002
403021
3402400003700160001
404233
18245816001
3402400003700290001
3402400100001240001
3402400100001290001
6200000100000570001
(46-76),(51-65)
6200000100000570002
6-8
6200000100000540004
(72-168)
6200000100000610006
6200000100000770004
6200000100000770005
(48-82),(17-31)
6200000100001200004
6200000100001200005
6200000100001490001
390031
6200000100001490002
6200000100002500001
6200000100002500002
6200000100002160001
6200000100002160002
6200000100002160003
6200000100003010004
6200000100003230004
6200000100004710001
6200000100004710002
390036
6200000100005480001
6200000100005480002
1300000100000210001
1300000100000160001
19,(2-22)
1300000100001570001
1300000100001990001
1300000100000060001
1,3,4,9,13,15,19,23,25,28,29,31
1300000100002810002
2/12,2/13
1300000100000330004
(93-119)
1300000100000040006
5600400100000090004
5600400100000090005
5600400100000150002
5600400100000150003
5600400100000010002
5600400100000010003
5600400100000200002
5600400100000200003
5600400100000220002
5600400100000220003
(2-92),(1-87)
5600400100000230004
(96-124),(93-119)
5600400100000230005
5600400100000480001
5600400100000340002
5600400100000340003
5600400100000420003
5600400100000030002
5600400100000030003
(21-43),(22-50)
5600400100000150004
(52-56),47
5600400100000150005
(73-81),8
5600400100000010004
5600400100000200004
(22-28),(56-60)
5600400100000340004
5600400100000020002
(21-43),(2-18)
5600400100000020003
5600400100000210003
(14-36),(1-13)
5600400100000210004
(75-117),(80-106)
5600400100000090001
5600400100000220004
5600400100000290002
(89-109)
5600400100000480003
(127-131),(126-134)
5600400100000230001
(1-233)
3000000100008610001
3000000100008610002
(126-174)
3000000100008610003
(29-999),(22-998)
3800000300004740003
3800000300006280001
3800000300006280002
3800000300005840004
3800000300002100001
3800000300002100002
3800000300006290001
(21-999),(14-998)
3800000300006290002
14,16,18-51
2404300000100220001
2404300000100220002
149-211
2404300000100730001
662711
1-148
2404300000100730002
2400000100001100001
660135
(23-37),(38-50)
2400000100005330003
(21-75),16
2400000100003550001
2400000100003550002
46,68
3600000100005240004
(221-225)
6300000100007150006
6300000100001330001
(95-97),(98-112)
6300000100001330002
(180-240)
6300000100001440007
6300000100009100011
(1-39),(22-76)
6300000100000420004
7200000103500010001
71401905006
7200000100003020001
7200000100300040001
71401916001
7200000100009190001
27 
7200000100300080001
31,33,34,35,41,43,44,46
7200000100300080002
7200000103700080001
71401923001
4,10,12
7200000100300330001
7200000103700040001
â¯3
7200000100002840003
7200000100002070001
7200000100009850001
7200000100002600001
7200000100004600001
7200000100000430001
50¢
7200000100005330007
53,51
7200000100002430015
(120-132)
7200000100001080001
(134-140)
7200000100001080014
(1-33),39,(2-174)
7200000100002150001
69,76,(80-84)
7200000100002870026
22,43,53,55
7500000100000080001
(48-998),(75-999)
7500000100000080002
(8-20),(24-44)
7500000100000080003
(1-41),(45-51),(57-73)
7500000100000080004
64,(68-998),(143-999)
7500000100000400003
7500000100001270001
(41-999),(38-998)
7500000100001270002
(1-43),(2-82),67
7500000100002970001
(45-65),(69-999),(84-998)
7500000100002970002
7500000100003280001
6-12,(13-61),(14-62),81
7500000100003280002
63-80,82-999
7500000100003280003
40,42
7500000100003950001
(1-74),(2-34)
7500000100003950002
7500000100004330001
(18-40),(1-43)
7500000100004330002
(42-94),(45-55)
7500000100004330003
(57-97),98-999
7500000100004330004
34¢
4200001500002510001
1-33,35-200
4200001500002510002
4200300100002060002
4200700000700030001
652175
32216804001
4200700000700080001
7800000000002050001
7800000000002050002
7800000000004760004
7800000000012070003
5000900301900020001
41-61
5000900301900000001
8-67
5000900303100000001
5000900400300040001
46218804012
5000900400300000001
5000900400500000001
46218804001
5000900400700000001
46218804008
5000900401400060001
46218804002
5000900401700020001
46218804015
5000900401700010001
2-23,31-49
5000900200000000001
143530
46218503000
5000900702100020001
46218810005
5000900702100010001
25-50
5000900801800000001
46218000000
17-26
5000900800600000001
46218816019
5000900800900000001
46218816016
5000900801700000001
46218816015
5000900801500000001
46218816017
5000900902500000001
46218819001
3-154
5000901100900000001
46218825014
85-110
5000901102000000002
5000901102100010001
13-61
5000901200600000001
46218828004
5000901201000080001
46218828008
5000901201000000001
5000901400100000001
46218834003
5000901400300000001
46218834011
5000901400800000001
46218834001
40-413
5000901500100010001
46218837002
5000901500100000001
7-59
5000901500200000001
46218837005
15-110
5000901500300000001
46218837012
115-144
5000901500900000001
46218837007
5000901501000000001
46218837001
9-135
5000901501100000001
46218837011
5000901501200000001
46218837010
2-27
5000901600000000001
46218556000
5000901600700000004
32-159
5000901701900000001
46218843024
62-77
5000901702000000002
5000901702100000001
143561
46218843003
5000901501000300001
5000900700100010001
5000900700300010001
3-47
5000900700300020001
50-88
5000900700300030001
5000900700300040001
5000900700300050001
19-83
5000900700400080001
3-73
5000900700400010001
5000900700400040001
5000900700400050001
5000900700400060001
4-66
5000900700400020001
5000900700400030001
5000900701800010001
46218810001
6-48
5000900701800020001
16-23
5000900700500010001
5000900700500030001
5000900700500040001
5000900700500050001
4-62
5000900700600010001
5000900700600020001
5000900700700010001
5000900700800010001
44-73
5000900700800020001
5000900700800040001
5000900700800050001
2-67
5000900700800030001
5000900701900030001
46218810003
5000900701900040001
5000900701900050001
5000900701900010001
5-26
5000900701900020001
4-94
5000900700900010001
7-26
5000900700900020001
5000900701000040001
3-80
5000900701000010001
5000900701000020001
5000900701000030001
5000900702000010001
46218810006
5000900702000020001
6-56
5000900702000030001
5000900701100010001
5000900701100020001
16-28
5000900701100030001
93
5000900701200010001
5000900701300010001
3-52
5000900701400010001
5000900701400020001
24-59
5000900701400040001
11-33
5000900701400050001
5000900702200020001
46218810002
5000900702200030001
5000900800100020001
5000900800100030001
68-81
5000900800200050001
5000900800200060001
6-112
5000900800200010001
5000900800200020001
5000900800200030001
5000900800200070001
5000900800200040001
5000900800300060001
5000900800300020001
5000900800300030001
5000900800300040001
5000900801900000001
5000900801900010001
5000900801900020001
5000900801900030001
5000900800400010001
7-15,98
5000900800400050001
5000900800400020001
9-37
5000900800400060001
6-46
5000900800400030001
1-9,21-64
5000900800500010001
5000900800500020001
5000900800500030001
3-64
5000900800500040001
5000900800600010001
8-124
5000900800700010001
5000900800700040001
13,41,42
5000900800700020001
5000900800800010001
5000900800800020001
5000900800800030001
5000900800800060001
2-104
5000900800800040001
5000900800800050001
5000900800900010001
7,20,32
5000900801200010001
7,38,68,85
5000900801200030001
2-154
5000900801200040001
5,26,42,62,100
5000900801300010001
5000900801400010001
5000900801400040001
5000900801400020001
5000900801400030001
5000900801700010001
5000900801700020001
5000900801700110001
5000900801700030001
5000900801700040001
5000900801700130001
5000900801700050001
5000900801700060001
5000900801700070001
5000900801700080001
5000900801700090001
5000900801700100001
1,23
5000900801700120001
1-9,38
5000900801500010001
5000900801500020001
5000900801500030001
5000900801500040001
5000900801500050001
5000900801500060001
5000900801500070001
5000900801500100001
5000900801500080001
5000900801500090001
5000900100400010001
5000900100400020001
5000900100400030001
5000900100400050001
5000900100400060001
5000900100400100001
5000900100400070001
5000900100400090001
5000900100400080001
5000900100500010001
5000900100000010001
46218501000
5000900100000020001
5000900100000030001
9-62
5000900100000040001
5000900100000650001
2-33,98
5000900100000060001
1-18,78,99,101
5000900100000070001
5000900100000080001
5000900100000630001
5000900100000740001
5000900100000090001
5000900100000100001
5000900100000110001
5000900100000640001
5000900100000050001
5000900100000120001
1-11,23
5000900100000130001
1-10,47
5000900100000140001
1-36,63
5000900100000150001
5000900100000760001
5000900100000160001
5000900100000710001
1-18,40
5000900100000540001
5000900100000170001
5000900100000180001
5000900100000190001
5000900100000200001
5000900100000210001
5000900100000220001
5000900100000550001
5000900100000660001
5000900100000230001
5000900100000240001
5000900100000250001
2-81
5000900100000260001
1-26,69
5000900100000670001
5000900100000680001
5000900100000270001
5000900100000290001
5000900100000300001
8-19
5000900100000720001
1-23,92
5000900100000310001
5000900100000320001
3-20
5000900100000330001
1-61,106-108
5000900100000340001
5000900100000350001
5000900100000360001
5000900100000370001
5000900100000380001
5000900100000690001
5000900100000390001
5000900100000400001
5000900100000560001
5000900100000410001
5000900100000570001
5-9
5000900100000580001
5000900100000590001
5000900100000430001
5000900100000440001
5000900100000450001
5000900100000460001
5-20
5000900100000600001
5000900100000480001
5000900100000490001
5000900100000500001
5000900100000510001
5000900100000700001
5000900100000730001
5000900100000520001
5000900100000620001
5000900100000530001
40-78
5000900900100010001
46218819025
5000900900300010001
5000900900400010001
2,22
5000900900500010001
5000900902500010001
5000900902500070001
5000900902500060001
5000900902500020001
3-13,81-99
5000900902500030001
2-32,73
5000900902500040001
11-29,71,72
5000900902500050001
5000900900800010001
5000900900800020001
9,14,20,51,105-290
5000900900800030001
5000900900800040001
2-63,142
5000900901000010001
5000900901000020001
1-11,40
5000900901200010001
7,8,37,38,48,55
5000900901300010001
5000900902000010001
5000900902000020001
5000901100100010001
5000901100100040001
5000901100400010001
5000901100600010001
3,21,30,55
5000901100800020001
5000901100800010001
4,5,8
5000901100900030001
5000901100900040001
7,9,10,13
5000901100900050001
154
5000901100900090001
1-9,43
5000901101000010001
46218825027
1-14,43
5000901101000020001
5000901101000030001
5000901101000040001
5000901101100010001
1-29,41-44
5000901101100020001
1-72,183
5000901101300010001
46218825001
5000901101300050001
5000901101300020001
5000901101300060001
5000901101300030001
5000901101300040001
5000901101400010001
5000901101400060001
5000901101400050001
5000901101400020001
5000901101400030001
5000901101400040001
5000901101600020001
5000901101600010001
5000901101700010001
5000901101800010001
46218825023
5000901101800020001
5000901101800030001
5000901101800040001
5000901101800050001
5000901101800060001
5000901101800070001
5000901101800080001
5000901101800090001
5000901101800100001
5000901101800120001
5000901101900020001
5000901101900010001
1-29,80,81
5000901102000050001
5000901102000060001
5000901102000010001
1-24,72
5000901102000030001
5000901102000070001
5000901102000080001
5000901102000150001
5000901102000020001
5000901102000040001
5000901102000090001
5000901102000100001
5000901102000110001
1-9,90-93
5000901102000130001
5000901102000140001
5000901102000160001
5000901102500010001
5000901102500020001
5000901102500030001
7,13
5000901102500040001
2,26
5000901201900020001
1,3,50,71
5000901201900040001
5000901201900010001
5000901202100010001
46218807013
5000901202100020001
5000901202100030001
5000901202100040001
5000901202100050001
5,18,22
5000901200600020001
6,12-29
5000901200600010001
5000901200800030001
5000901200800040001
5000901200800050001
5000901200800060001
5000901200800070001
5000901200800080001
5000901200800100001
5000901200800110001
5000901200800120001
5000901200800130001
1-121
5000901200800140001
5000901200800150001
5000901200800160001
1-51,91
5000901200800190001
5000901200800260001
5000901200800200001
5000901200800210001
5000901200800220001
5000901200800230001
5000901200800240001
5000901200800250001
5000901201000010001
1-7,151
5000901201000110001
5000901201000020001
5000901201000030001
5000901201000040001
5000901201000050001
5000901201000060001
5000901201000070001
5000901201000090001
5000901201000120001
1-23,54-57
5000901201000100001
2-51
5000901300100010001
5000901300100120001
5000901300100020001
5000901300100030001
5000901300100170001
5000901300100040001
5000901300100050001
5000901300100060001
5000901300100070001
5000901300100110001
5000901300100080001
5000901300100090001
1-9,11,15,36-46
5000901300100180001
5000901300100160001
5000901300100150001
5000901300100100001
5000901300100140001
5000901300100130001
5000901300200120001
2,3,4,10
5000901300200020001
5000901300200130001
1,4/9,8/9,9/10,10/7
5000901300200030001
5000901300200040001
1,2,3/14
5000901300200050001
5000901300200060001
5000901300200140001
5000901300200150001
5000901300200010001
2,4,5,6,7/11,12,16/5,20,23
5000901300200070001
1,3,4,12,15,19,21
5000901300200080001
5000901300200170001
5000901300200160001
5000901300200100001
2,10/14
5000901300200110001
5000901300300010001
5000901300800000001
46218831012
5,15,29,40,45,66,72,80,82,98
5000901300800010001
1,6,24,30,34,42,61
5000901300800030001
12,57,64
5000901300800020001
5000901301000010001
4,7,9,10,14,21-76
5000901301000020001
9,12,14-26
5000901301000030001
1,2,4,5,7,9,11
5000901301100010001
5000901301100120001
4,5,7,8,9-41
5000901301100040001
5000901301100050001
7,9,12,15-21,25,29,31
5000901301100020001
5000901301100130001
3,5,6,8,9,10,12
5000901301100070001
5000901301100080001
5000901301100090001
1-14,22-24
5000901301100030001
5000901301100100001
5000901301100110001
2-63
5000901301100060001
5000901400100010001
5000901400100020001
5000901400100040001
1-8,11-15
5000901400100030001
1-16,31
5000901400200010001
46218834005
5000901400200020001
5000901400300010001
5000901400300020001
5000901400300030001
3,7,15,19,21,23,24,26
5000901400600010001
46218834002
5000901400600020001
5000901400800010001
3,19,37,41,45,46
5000901400800020001
1,3,6,8,9,12
5000901400800030001
5000901400800040001
13,15,40,75
5000901400800050001
5000901400800070001
5000901400800080001
18,37
5000901400800090001
5000901400900010001
46218834009
1-11,18,16
5000901400900020001
5000901400900030001
1,6,16
5000901500100120001
166,184,188,192,206,210,250,258
5000901500100080001
364-386,401,403,413
5000901500100090001
106-142
5000901500100130001
1-15,42,51-79
5000901500100020001
60-100,704
5000901500100110001
1-62,201,202,208
5000901500100030001
264-363
5000901500100070001
1-189
5000901500100040001
1-27,38,57,62,65
5000901500100050001
377,378,711,713/1,714
5000901500100100001
5000901500100060001
1-120,197-199
5000901500200010001
5000901500200120001
1-8,32
5000901500200020001
5000901500200130001
5000901500200140001
5000901500200030001
6/25,10-19
5000901500200150001
5000901500200200001
2-7,12-14
5000901500200160001
5000901500200170001
2,4,5,7,9,11
5000901500200180001
5000901500200090001
5000901500200100001
5000901500200040001
4,10,11
5000901500200190001
5000901500200050001
5000901500200060001
1,2,19,24
5000901500300030001
1-5,13-24,30-35,66,83,99-102
5000901500300020001
5000901500300070001
1,2,104,105,110,111,113,116,120
5000901500300040001
12,15,16,19
5000901500300050001
5000901500300060001
6,18,30,45
5000901500800010001
5000901500800020001
70-151
5000901500900010001
1-16,27
5000901501000160001
1,3,5,10,11,12
5000901501000040001
1-10,17,24
5000901501000030001
5000901501000010001
1-6,19-40
5000901501000020001
5000901501000050001
5000901501000150001
1-22,28,29
5000901501000070001
1-21,26,28
5000901501000090001
1-10,12,15
5000901501000080001
5000901501000110001
5000901501000120001
2,4,6,10
5000901501000130001
5000901501000140001
1-34,48
5000901501000180001
1-20,25,28
5000901501000190001
5000901501000200001
5000901501000210001
5000901501000230001
5000901501000240001
5000901501000250001
5000901501000260001
5000901501000270001
3500100029600000003
1-40,(53-65)
1800000100006230001
426062
5002200023300000001
143081
46241870012
5002200016800000001
46241804002
(154-358),(362-998)
5400000100010950003
(261-999),360
5400000100010950004
59,(63-999)
5400000100006360004
48-97
2301500100000030001
353180
2335
03221501000
2301500100000030002
353181
46-87
2301500100000710001
2301500100000710002
2301500100000210001
11-100
2301500100000210002
353183
2301500100000970001
353187
2301500100000970002
0204200100001960008
0200100100009580017
0200100100001840012
3900000101100030001
3700500100000660001
155410
3703
24205501000
3700500100000660002
155412
90,96,(93-109)
5500000100006610006
6901200200400000001
171614
6909
28224804006
6901200200300000001
171632
28224804001
6901200203000000001
28224804031
6901201700800000001
171631
28224830001
6901201901400000001
171607
28224808015
6901101300200000001
171560
6925
28222824001
6901100300100000001
171580
28222834001
6901300200100000001
171472
6926
28226808001
6901401403800000001
171536
6927
28228810020
6901401300100000001
171520
28228814001
6901401305300000001
171525
28228814022
6901400700100000001
171543
28228816001
6901400702100000001
171534
28228816017
6901401901600000001
171524
28228823007
6901401900300000001
28228823017
6901401500300000001
171515
28228820016
6901401000200000001
171523
28228826002
6901401000100000001
28228826001
6901401005500000001
171522
28228826029
6901401003600000001
171535
28228826028
6901401602500000001
171547
28228830015
6901401600100000001
28228830001
6901400500500000001
171521
28228832001
6901401802300000001
171514
28228834001
6901400600100000001
171533
28228835003
6901400600600000001
28228835007
6901400600400000001
28228835008
6901400601200000001
28228835001
6901400304000000001
28228822001
6900000600002980003
(4-40)
6900000600002260003
(35-999),(50-999)
6900000600001540002
(46-114),(53-121)
6900000600001290005
6900000600000620003
6900000600000630004
(63-71),66,68,70
7200000100001660015
(209-247)
7200000100002310006
60,62,71,72,78,85,90,91,92
6900000600001030006
58,60,64,80,81,83,98,103,113,121,123,153
6900000600001610004
8000100000100000001
674462
7580
8001
76122651000
8000100000200000001
687000
76122902001
8000100000500000001
674472
76122904001
8000100000600000001
674473
76122908001
8000100000700000001
674471
76122912001
8000100000300000001
687200
76122653000
8000100000400000001
687211
76122654000
8000100000800000001
674464
76122916001
8000100000900000001
674467
76122920001
8000100001000000001
674465
76122924001
8000100001100000001
674461
76122928001
8000100001200000001
674466
76122932001
8000100001300000001
674463
76122936001
8000100001400000001
76122940001
8000200000200000001
8002
76125904001
8000200000300000001
687213
76125908001
8000200000400000001
687212
76125912001
8000200000100000001
76125916001
8000200000500000001
687218
76125920001
8000200000600000001
76125922001
8000200001000000001
76125912002
8000200000700000001
687214
76125924001
8000200001100000001
687217
76125928001
8000200000800000001
687215
76125932001
8000200000900000001
687216
76125936001
8000300002200000001
8003
76128651000
8000300002600000001
8000300001100000001
76128932001
8000300000200000001
674437
76128904001
8000300002400000001
8000300000300000001
687434
76128908001
8000300002300000001
8000300002000000001
8000300000400000001
674439
76128912001
8000300002700000001
8000300000500000001
674431
76128916001
8000300001700000001
8000300001500000001
674460
76128948001
8000300000100000001
8000300001800000001
8000300000600000001
674435
76128918001
8000300000700000001
76128920001
8000300002100000001
8000300001600000001
8000300001900000001
8000300000800000001
674440
76128922001
8000300000900000001
674438
76128924001
8000300001000000001
76128928001
8000300002500000001
8000300001200000001
674433
76128936001
8000300001300000001
674452
76128940001
8000300001400000001
687436
76128944001
8000100001500000001
7500000100100000001
672015
7500000100200000001
672018
7500000101400000001
7500000100300000001
7500000102400000001
7500000101500000001
7500000101200000001
7500000102100000001
7500000101300000001
7500000101600000001
672042
7500000100500000001
672026
7500000102600000001
7500000100600000001
7500000101700000001
7500000101900000001
672043
7500000101800000001
672016
76401000001
7500000100800000001
672032
7500000100900000001
7500000102200000001
7500000102500000001
7500000101000000001
7500000100700000001
7500000102300000001
7500000102700000001
7500000101100000001
7500000100400000001
7500000102000000001
672045
1-49,51,53,55,57,59,61
4200300100000860001
4200001300004060011
4200001300006090001
4200001300006090002
4200001300011710002
15ª
4200001300011710003
4200001300011710004
3301400000200000001
601222
17250850002
3301400003000000001
601232
17250848005
3301400003100000001
601224
17250836002
3301400003500000001
601241
17250860006
3301400004000000001
17250850005
3301400004300000001
601215
17250824001
3301400004400000001
601231
17250860009
3301400004700000001
601213
17250840005
3301400005000000001
17250836003
3301400005100000001
17250860010
3301400005200000001
17250848007
3301400005400000001
601230
17250850006
3301400005600000001
601217
17250812006
3301400005900000001
601233
17250848009
3301400006000000001
17250850007
3301400006300000001
17250850008
3301400006600000001
601246
17250844001
3301400007500000001
17250836004
3301400007800000001
601211
17250820005
3301400010200000001
17250824020
3301400011100000001
17250844008
3301400011400000001
17250850011
3301400012400000001
601214
17250808008
3301400013800000001
17250836005
3301400014800000001
601225
17250850015
3301400016100000001
17250850016
3301400017000000001
17250820008
3301400017600000001
17250824029
3301400017800000001
601223
17250860024
3301400018100000001
601247
17250844016
3301400018500000001
17250848018
3301400019000000001
17250812024
3301400019200000001
17250848017
3301400019400000001
601235
17250856008
5901200024200000001
617474
57230864002
5901200024100000001
57230864001
5901200021600000001
617451
57230855008
6300000700005550007
(28-70),(23-33)
6300000700003520002
6300000700004180001
48,(47-91)
6300000700004180002
(2-46),(5-19)
6300000700005880003
34ª1áâà33,34ª2áâà2,34ª2áâà3,34ª2áâà4
7700000000000020070
25áâà5,25áâà7,25áâà8
7700000000000310028
7700000000000360004
19ª1,23ª2,23ª2áâà2,23,25ª1,27
7700000000001560048
13áâà2,14
7700000000001600003
63áâà4,63áâà5,65áâà1,65áâà2
7700000000001630063
17,19ª1,19ª2,19,19,21,23,23áâà2,25/1
7700000000001640015
7700000000002100014
20áâà35,20áâà36,20áâà1
7700000000002660016
88ª19,88ª20,88ª21,88ª22
7700000000003300136
73áâà7,73áâà1,73áâà2,73áâà3,73áâà4
7700000000003710024
32,34,34áâà1
7700000000004210021
36,36áâà1,38ª1,38ª1áâà2,38ª2,40ª1,40ª2
7700000000004550026
10áâà10,10áâà11,10áâà12,10áâà13
7700000000004590031
25áâà3,25áâà4,25áâà5,25áâà6
7700000000004960160
61ª1,61ª2,61ª2,61ª3,63ª1,63ª2,65ª1
7700000000005130038
31ª1,31ª2,31ª3
7700000000005320020
71,71áâà4,73áâà1,73ª3,73/68áâà2
7700000000005330030
6/2áâà1,6/2áâà2
7700000000005690010
14/33áâà2
7700000000005760006
34/1áâà5,36
7700000000006870008
19áâà21,21,23,23ª1,24,26/30
7700000000006970009
2ª1,2ª2,3,3áâà1,5
7700000000007200016
7700000000007270002
30ª2,30,32/37,36,36áâà2,36ª2,36ª2áâà1
7700000000007500046
54/2áâà7,54/2áâà8,55/32
7700000000007580018
3_5áâà33,4,4áâà2,7,9áâà1,11áâà2,11áâà3
7700000000007660006
28áâà3,30
7700000000007890008
85áâà2,87,89áâà5,91,95
7700000000008300010
10ª114,10ª116,10/1,10áâà1,10áâà2
7700000000008440029
10áâà3,12,14,14,15,15áâà3
7700000000008440030
7700000000009040002
7700000000009350023
7700000000009590012
57,57áâà1,57ª1
7700000000009780015
49,51
7700000000009850007
19áâà3,19áâà4,21
7700000000010010005
19/20áâà1,21
7700000000010410004
26áâà3,28
7700000000011730005
68áâà24
7700000000012400038
73áâà33,73áâà34,75
7700000000013840023
7700000000013970014
17áâà13,17áâà14,17áâà16,17áâà18,17áâà1
7700000000013970015
7700000000013980020
27ª2áâà2
7700000000014520023
21ª2
7700000000014580010
30,30áâà1,32
7700000000014620008
27áâà1,27,29áâà1
7700000000014640021
22áâà5,24áâà3
7700000000015060004
10ª3áâà3,12
7700000000015490007
48/2áâà1,48/2áâà2
7700000000015740010
24áâà4,30áâà1,30áâà2,30áâà3,30áâà4
7700000000015890013
30áâà5,30áâà6,30áâà7,30áâà8,36áâà1
7700000000015890014
95ª3,95ª4
7700000000016890120
117ª6,117ª7,117ª8,117ª9,117ª10,119ª1
7700000000016890121
24áâà1,26ª1,26ª2,28,28áâà2,28áâà3,28ª1
7700000000016910008
99áâà10,99áâà11,99áâà13,99áâà14
7700000000017040006
99áâà15,99áâà16,99áâà19
7700000000017040007
7700000000017320002
7/4áâà9,7/4áâà9
7700000000017500004
1ª3áâà1,1ª3áâà2,1ª3áâà3,1ª4,1,2,4
7700000000017970002
4áâà2,4,6,6áâà1
7700000000017970003
6,6,8
7700000000018220012
10ª1áâà2,10ª2,12,12áâà1,12áâà2,14
7700000000018640021
10ª6
7700000000018720004
7700000000018920020
11áâà9,11áâà12
7700000000020080007
60,62ª1áâà1,64ª4,66áâà1,71/32
7700000000020710029
21/29
7700000000021050012
7700000000021060016
11áâà1
7700000000022210003
7700000000022330001
83áâà1
7700000000022400015
22,22ª1,22ª1áâà1,22,24,24áâà1,24áâà2
7700000000022470010
10áâà8,12áâà1,12áâà2
7700000000022890005
18/15áâà6
7700000000023240013
8áâà3,9,11,11áâà1,11áâà2,11áâà3
7700000000023250004
23ª3,24,25áâà1,25ª2,26,28
7700000000023520004
27áâà38,27áâà39,27áâà41,27_29áâà1
7700000000023680027
137áâà3,137áâà4,137áâà5,137áâà6
7700000000023920122
137áâà7,137áâà8,137áâà9,137áâà10
7700000000023920123
137áâà11,137áâà12,137áâà13,137áâà14
7700000000023920124
137áâà15,139áâà2,139áâà3,139
7700000000023920125
125ª1áâà1,125,127áâà1,127áâà2
7700000000023920126
48áâà6,49áâà1,49áâà3,49áâà2,50/2áâà1
7700000000024250042
19/3áâà2
7700000000024410013
11/13áâà2,12
7700000000025180003
10ª2,12
7700000000025480017
37áâà4,37áâà5,37áâà6,37áâà7
7700000000026420032
24ª4áâà3,24ª4áâà4,24ª5,24ª6,24ª7
7700000000026510020
24ª7áâà1,26/11,28ª1,28ª2,28
7700000000026510021
12/14ª1
7700000000026510022
85áâà2,85áâà3,85,87áâà1,87áâà2
7700000000026570036
34áâà3,34áâà4
7700000000026600006
36,36áâà1,36áâà3
7700000000026820028
16ª6
7700000000026840012
35áâà13,37áâà1
7700000000027760010
9áâà13,9áâà14,9áâà15,9áâà16,9áâà17
7700000000028590009
16ª3,17ª1,17ª1áâà1,17ª1áâà2,17ª2,18,19
7700000000028590010
20,20áâà2,22,22áâà2,22ª1,22ª2,24,24,26
7700000000028590011
31/4áâà2
7700000000028770021
36áâà2
7700000000028790008
14áâà2,16,18,18áâà1
7700000000030250014
8/2áâà1
7700000000030300002
16ª2
7700000000030440006
5áâà3,5ª1,5ª2,5ª2áâà1,5,5áâà2
7700000000030750004
7ª1áâà2,9,9,9áâà3,13,13áâà2,13áâà3
7700000000036500002
15,15áâà1
7700000000036500003
41áâà2,41áâà3,41áâà4
7700000000036510004
7700000000036990004
2áâà66,2áâà72,2ª1,2ª1áâà1
7700000000037410009
4,4áâà1,4áâà2
7700000000038410002
4áâà2,4áâà3,4áâà4,4ª1,4ª2,4,4,7
7700000000041190002
7700000000041190003
7áâà8,9áâà1
7700000000041190004
23áâà3
7700000000041480005
13áâà3,13áâà4,13áâà5,18,18áâà1,18áâà2
7700000000041910005
7700000000041910006
18áâà8
7700000000041910007
2áâà94,2áâà95,2áâà96,2áâà97,2áâà98
7700000000042260012
2áâà99,2áâà100,2áâà101,2áâà102,2áâà103
7700000000042260013
7700000000042260014
7700000000042260015
2áâà112,2áâà114
7700000000042260016
11,11áâà1,11áâà2,11ª1,11ª2,11ª3
7700000000042710001
11ª3áâà1,17,17ª1,19,19áâà1,19áâà2,21
7700000000042710002
21ª1,21ª1áâà1,25,25áâà1,27,27ª1
7700000000042710003
58ª2,58ª3,58ª4,58ª5,58ª6,58ª7,58ª8
7700000000050080021
58ª9,58ª10,58ª11,60ª1,60ª2,60ª4,60ª5
7700000000050080022
60ª9,60ª11,60ª13,62ª1,62ª2,66áâà31
7700000000050080023
10áâà3,10ª3
7700000000070070003
13/3
7700000000070110002
31áâà7
7700000000070190012
38/2áâà1,38/2áâà2,38/2áâà3
7700000000070240026
18áâà1
7700000000070460002
31/6áâà1
7700000000070530012
40áâà4,40áâà5
7700000000071620015
33áâà3,33áâà4
7700000000071990019
5/3ª2,5/3,6,7/4áâà2,7/4ª1,7/4ª5,7/4ª6
7700000000072000044
8,8áâà1,9ª1,9ª2,9ª2,10,10áâà5,11,12
7700000000072000045
9áâà14,9áâà15,9áâà16,9áâà17,9áâà18
7700000000072230004
9áâà19,9áâà20,9áâà21,9áâà22,9áâà24
7700000000072230005
9áâà25,9áâà26,9áâà27,9áâà28,9áâà29
7700000000072230006
9áâà30,9áâà31,9áâà32,9/5áâà12
7700000000072230007
19áâà1,20áâà1,21,21áâà1,22áâà1
7700000000073180005
5ª2áâà1,5ª2áâà2,6,7ª1,7ª1áâà1,9,9áâà1
7700000000073240002
10ª1,10ª1áâà1,10ª1áâà2,11,11áâà1
7700000000073240003
11áâà2,12ª2,13ª2áâà1
7700000000073240004
17,17áâà1,19,21,21áâà1,22áâà1,23
7700000000073470003
7700000000073690001
áâà1,áâà2,áâà3,áâà4,áâà5
7700000000073690002
3,3áâà1,9,9áâà1,11,11áâà1,13,13áâà1,15
7700000000073760001
7700000000073760002
5,7,7áâà1,8,9,9áâà1,9áâà2
7700000000073770001
7700000000073810001
10,10áâà1,10áâà2,10áâà3,10áâà4,10áâà5
7700000000073830001
8áâà1,10,12
7700000000073880001
2áâà1,3/10áâà2,3/10áâà7,3/10áâà8,5áâà1
7700000000073900001
5áâà3,5áâà4,5áâà1,7áâà1,7áâà2
7700000000073900002
7700000000073940001
ª621,ª621,ª622,ª622áâà1,ª623
7700000200000000130
ª623áâà1,ª624,ª624áâà1,ª627,ª627áâà1
7700000200000000131
ª426,ª426áâà1,ª426áâà2,ª426áâà3
7700000200000000157
ª427,ª428,ª428,ª429,ª429áâà1,ª429áâà2
7700000200000000158
(2-194)
2600000100001240003
3700700100004630001
155814
24405000000
3700700100004630002
155809
1-185
3700700100004620001
155801
186-999
3700700100004620002
155804
3700700100004530001
3700700100004530002
155810
3700700100004470001
3700700100004470002
1-22,(24-38)
3700700100004140001
(23-39),40-999
3700700100004140002
1-85,(87-129)
3700700100003950001
(86-130),131-999
3700700100003950002
3700700100003810001
3700700100003810002
3700700100003610001
155802
3700700100003610002
155815
3700700100003420001
3700700100003420002
3700700100003400001
3700700100003400002
1-38,(40-68)
3700700100003110001
(39-69),70-999
3700700100003110002
3700700100003020001
33,35,37,39-999
3700700100003020002
3700700100002970001
155813
3700700100002970002
1-43,(45-63)
3700700100002920001
(44-64),65-999
3700700100002920002
3700700100002800001
3700700100002800002
1-54,(55-95)
3700700100002790001
(56-94),96-999
3700700100002790002
1-36,38,42
3700700100002220001
37,39,41,43-999
3700700100002220002
3700700100002170001
49-78
3700700100002170002
3700700100002170003
3700700100001990001
155806
3700700100001990002
3700700100001940001
3700700100001940002
1-24,(26-56)
3700700100001900001
(25-55),57-999
3700700100001900002
1-3,28-36
3700700100001820001
4-27,37-999
3700700100001820002
3700700100001690001
17,19-999
3700700100001690002
3700700100001650001
3700700100001650002
1-59,61,63,65
3700700100001620001
60,62,64,66-999
3700700100001620002
57-59
3700700100001600001
1-56,60-999
3700700100001600002
29-35
3700700100000010001
1-28,36-99
3700700100000010002
1-53,55
3700700100001320001
54,56-999
3700700100001320002
1-14,(16-54)
3700700100001070001
(15-53),55-999
3700700100001070002
1-11,17,19,21
3700700100001010001
12-16,18,20,22-999
3700700100001010002
41/28
3700700100000890001
3700700100000890002
3700700100000880001
3700700100000880002
1-38,(40-76)
3700700100000850001
(39-75),77-999
3700700100000850002
3700700100004270001
3700700100004270002
1-14,16,18,20,22
3700700100000710001
15,17,19,21,23-999
3700700100000710002
3700700100000650001
3700700100000650002
1-14,15,17,19,21
3700700100000280001
16,18,20,22-30
3700700100000280002
3700700100000280003
3700700100000550001
155800
137-999
3700700100000550002
155805
3700700100000370001
155808
1-27,29-999
3700700100000370002
3700700100000300001
3700700100000300002
1-27,58-109
3700700100000050001
28-57
3700700100000050002
221-999
3700700100000050003
110-220
3700700100000050004
3700700100000070001
3700700100000070002
3700700100002760001
3700700100002760002
1-24,25,26,44 
3700500100000570001
25 ,26 ,27-999
3700500100000570002
5302000007200000001
174200
49250830008
7800000000005680001
7800000000005680002
(141-143)
7800000000006910013
(93-95)
7800000000009470016
2400000400000110001
2400000400000270003
662976
(7-41),(8-42)
2400000400000210003
4,6,8,11
2400000400000380001
7,19,21,23,25
2400000400000370001
3,4,8,10,43
2400001200001300001
662150
2443
04403000000
93,97,101
2400001200001300002
662152
2400001200001340001
2400001200001340002
662162
(5-9),(27-49),(20-36),(38-64)
2400001200001770001
662156
2400001200001770002
662165
1,13,19,22
2400001200004370001
662161
2-12,29
2400001200004370002
2400001200005070001
2400001200005070002
662153
2400001200004210001
2400001200004210002
2400001200004290001
(24-60),(39-85)
2400001200004290002
2400001200001920001
2400001200004610001
2400001200005060001
662159
4-11,13-16,18-32
2400001200005060002
58 
2400001200003200001
662155
(21-49),(55-63),(20-56)
2400001200003200002
(18-58),(21-45)
2400001200001870001
(53-73),(60-76)
2400001200001870002
(11-51),(12-58)
2400001200001940001
(1-7),(53-67),(4-10),(60-74)
2400001200001940002
(23-53),(26-62)
2400001200002080001
2400001200002080002
(21-53),(26-54)
2400001200004740001
2400001200004740002
(7-37),(4-24),43,(44-48)
2400001200003000001
(45-51),(52-58),59,66
2400001200003000002
7,9,10,12,(23-67),(28-56)
2400001200003320001
(60-82),(69-85)
2400001200003320002
2400001400000450001
663181
2447
04412000000
(2-70),(23-123)
2400001400000450002
663185
(1-81),(42-82)
2400001400000480001
7100000100001750001
7102400025900000001
301214
70248884001
7102400016300000001
70248808015
7102400016400000001
70248808016
(27-999),(36-998)
7400000100000010002
7400000100005400001
,40,66
7400000100005400002
5002200009600000001
46241840008
5002200012700000001
143075
46241843006
5002200019000000001
46241840007
5000000300000060001
141985
46418000000
(17-45),(24-46)
5000000300000060003
141981
5000000300000740002
1,3-6
5000000300000670001
141980
5000000300000670002
5000000300000600001
,(11-99)
5000000300000600002
141986
5003700000200000001
46256828045
5003700000300000001
142380
46256816003
5003700000400000001
142323
46256828072
5003700000500000001
46256828066
5003700000700000001
142324
46256804030
5003700000900000001
142341
46256828003
5003700001000000001
46256828074
5003700014500000001
46256828050
5003700014700000001
142326
46256804026
5003700002200000001
46256828052
5003700002400000001
142321
46256828032
5003700002800000001
142322
46256804010
5003700003000000001
142305
46256828055
5003700003200000001
46256828064
5003700003900000001
46256828071
5003700004500000001
46256828068
5003700004600000001
142350
46256816032
5003700004800000001
46256828056
5003700004900000001
46256816006
5003700014300000001
142360
46256816027
5003700005100000001
46256828065
5003700005700000001
46256828054
5003700005800000001
46256828044
5003700006100000001
46256804032
5003700006300000001
46256804027
5003700006400000001
46256828031
5003700006500000001
46256804023
5003700007200000001
46256828039
5003700014900000001
46256816014
5003700007300000001
46256816015
5003700007400000001
46256804028
5003700015000000001
46256828046
5003700007700000001
46256828040
5003700008100000001
142340
46256828020
5003700008200000001
46256816026
5003700008300000001
142390
46256816031
5003700008700000001
46256816004
5003700008900000001
46256804021
5003700009000000001
46256804001
5003700009100000001
46256804025
5003700009200000001
46256555002
5003700009700000001
46256828058
5003700010000000001
46256828043
5003700010100000001
46256828036
5003700010400000001
46256804009
5003700010500000001
46256816028
5003700010600000001
46256828047
5003700010900000001
46256828042
5003700011100000001
46256555001
5003700011300000001
46256828037
5003700011600000001
46256828041
5003700011800000001
46256804029
5003700012200000001
46256555000
5003700012300000001
46256828009
5003700014200000001
142370
46256816025
5003700012600000001
46256816001
5003700012800000001
46256816011
5003700013000000001
46256828073
5003700013100000001
46256828049
5003700013300000001
46256828053
5003700013500000001
46256804022
5003700013700000001
46256816002
5003700013600000001
46256828059
5003700013800000001
46256828048
4700700050000000001
188370
4705
41218824027
4700700001300000001
188371
41218824003
4700700001700000001
188360
41218824015
4700700006200000001
41218824007
4700700015500000001
188303
41218818003
1-4,5,5,6-17,18,18,19-51,52,52,53-62
4700700023000000001
41218818005
63,63,64-71,72,72,72,73-77,78,78
4700700023000000002
79-89,90,90,91-112
4700700023000000003
1-13,14,14,15-19,20,20,21-35,36,36
4700700023900000001
188301
41218848029
37-45,46,46,47-51,52,52,53-55,56,56
4700700023900000002
57,57,60-71
4700700023900000003
1,1,2-10,11,11,12-15,16,16,17,18,19
4700700016300000001
41218848017
20,20,21-37,38,38,40-42
4700700016300000002
1-13,14,14,15-20,21,21,22,22,23,24,25
4700700020700000001
41218848024
24,24,26,26,27-48,49,49,51-89
4700700020700000002
1,1,2,2,3,3,4,4,5,5,6,7,8,8,9-58
4700700002400000001
188352
41218848003
59,59,59,60-78
4700700002400000002
4700700024400000001
41218848030
4700700007400000001
41218848004
1,2,2,3-74
4700700020400000001
188351
41218848023
4700700010500000001
41218848010
4700700008600000001
41218848006
4700700011700000001
41218848013
1,1,2,2,3-9,10,10,10,10,11,12,12
4700700009400000001
188365
41218860005
13,14,15,15,16-19,20,20,21-38,39,39
4700700009400000002
40,40,41-51,52,52,53-72,73,73,75,75
4700700009400000003
76,77,77,78,79,79,80-86,87,87,88-92
4700700009400000004
93,93,94-96,97,97,98,98,99,100,101
4700700009400000005
101,102,103,104,104,105,106,106,106
4700700009400000006
107,108,108,108,109,110,111,111,112
4700700009400000007
112,113-117,118,118,119,120
4700700009400000008
1,2,2,3,3,3,4,5,5,6-9,10,10,10,11
4700700010200000001
41218860006
12,12,13,13,14-16,17,17,18,18,18,26
4700700010200000002
19-25,26,27,28,28,28,29,30,30,31,31
4700700010200000003
32-34,35,35,36,37,37,38,39,39,39,45
4700700010200000004
40-44,45,46-52,53,53,53,53,54-56,57
4700700010200000005
57,58,58,58,59,60,61,61,61,61,62
4700700010200000006
63,63,64,64,65,66,66,66,67-76,77,77
4700700010200000007
78,79,79,80,80,81,82,82,82,83-88,89
4700700010200000008
89,89,90,90,91,92,93,93,94-100
4700700010200000009
1,1,2-9,10,10,11,12,12,13,13,14-20
4700700021900000001
188358
41218861001
1,2,3,3,3,4,4,5-10
4700700002700000001
188353
41218816002
1,1,2-8,9,9,10-28
4700700002900000001
188354
41218816003
1-5,6,6,7-21,22,22,23,24,25,25,26-33
4700700003000000001
188300
41218816004
34,34,34,35-37,38,38,39-54
4700700003000000002
1,1,1,2-12,13,13,14-60,61,61,62-75
4700700005200000001
41218816007
4700700005900000001
41218816008
1,1,2,2,3,3,3,4,4,5,5,6,6,7,7,8
4700700006900000001
41218816009
8,9,9,10,10,11,12,12,13,13,14-37,38
4700700006900000002
38,39-47,48,48,50-58
4700700006900000003
1,2,2,3-9,10,10,10,11-14,15,15
4700700007500000001
41218816011
1,1,1,2,3,3,4-7,8,8,9,10,17,17,18
4700700008800000001
188340
41218816013
18,18,18,19-28
4700700008800000002
12-16,11,11,3,10
4700700008800000003
1-10,11,11,12,13,13,14,14,15-21,22,25
4700700009600000001
41218816012
22,23,24,25,26,26,27,27,27,28-30,31
4700700009600000002
31,31,32,33,33,33,34-37,38,38,39-55
4700700009600000003
56,56,57,58,58,59-62,63,63,64,64,65
4700700009600000004
66-69,70,70,71,71,72-75
4700700009600000005
1,2,2,2,2,3,4,5,5,6-9,10,10,11,11
4700700016200000001
41218816016
11,12-14,15,15,16-19
4700700016200000002
1-18,19,19,20,20,21-23,24,24,24,24
4700700019000000001
41218816017
24,24,25,26,26,27,27,28,29,30,30,39
4700700019000000002
30,30,31-38,39,40-76,77,77,79-92,93
4700700019000000003
93,95-99
4700700019000000004
1,2,3,3,4-12
4700700022700000001
41218816019
1,1,1,2-8,9,9,11-14,15,15,17-48
4700700000900000001
188348
41218804019
11,11,13-41,42,42,43,43,44-49
4700700002500000001
41218804002
1,2,2,3-21,22,22,23-36
4700700004900000001
188324
41218804004
1,2,2,3-11,12,12,13,13,13,14-41,42
4700700017500000001
188320
41218804012
42,43,44,44,45-53,54,54,55,55,56-59
4700700017500000002
60,60,61,62,62,63-67,68,68,69-86,87
4700700017500000003
87,88-132,133,133,134-156,157,157
4700700017500000004
158-172,173,173,173,175-183,184,184
4700700017500000005
185,186,186,187-192,210,210,211,212
4700700017500000006
212,213,214,214,215-248,249,249
4700700017500000007
194-209,193,193
4700700017500000008
1-3,4,4,5,6,6,7-18,19,19,20-24
4700700013200000001
41218804009
1,1,2-14,15,15,16,17,17,18,19,19
4700700024100000001
41218804018
20-43,44,44,46-48
4700700024100000002
1,1,2-56
4700700011400000001
188335
41218000000
1,1,2-5,6,6,7-26
4700700001100000001
41218852015
4700700017200000001
188356
41218852011
4700700021100000001
41218852013
4700700024000000001
41218852014
4700700012500000001
41218576006
1,2,3,3,4-6,7,7,8-15,16,16,17-20,21
4700700002000000001
41218576003
21,22,23,23,24,24,25-40,41,41,42-79
4700700002000000002
80,80
4700700002000000003
4700700011600000001
41218576005
1,1,1,1,2,3,3,4-6,7,7,8,8,9-19,20
4700700001400000001
41218576002
20,21-25,26,26,27-36,37,37,38-41,42
4700700001400000002
42,43,44,44,45,46,46,47-51,52,52,54
4700700001400000003
54,55,56
4700700001400000004
1,2,3,3,4-15,16,16,17,18,18,19,20,20
4700700013900000001
41218576008
21-25,26,26,27,28,29,29,30,30,31-35
4700700013900000002
36,3637,37,38,38,39,39,39,40,41,42
4700700013900000003
4700700013900000004
1,2,2,3-23,24,24,25,26,26,27-34,35
4700700000700000001
41218576001
35,36-46,47,47,48-65,66,66,67-70
4700700000700000002
1-11,12,12,13-18,19,19,19,20,21,21
4700700022400000001
41218576012
22,23,23,24,25,26,26,27-29,30,30
4700700022400000002
31-39,40,40,41,41,42,42 ,42,43-45,46
4700700022400000003
46,47-49,50,50,51,52
4700700022400000004
1,1,2,3,4,5,6,6,7,7,8-10,11,11,14
4700700008000000001
41218576011
14,14,15,15,15,15,16,16,16,17,17
4700700008000000002
18-23,24,24,24,24,25,25,26,26,27
4700700008000000003
27,28,29,29,30,31,31,32,32,33-39,40
4700700008000000004
40,41,42
4700700008000000005
2,4,4,4,6,8,10,10,10,10,12,12,14
4700700003200000001
188382
41218828003
14,14,14,16,16,16,18,18,20,22,22
4700700003200000002
24,24,26,28,30,32,34,34,1,3,3,5,5,7
4700700003200000003
7,9,9,11,1113,15,15,15,15,17,17
4700700003200000004
19,19,19,19,21,21,23,23,25,27,29,31
4700700003200000005
31,33,33,35,35,37,39,41,41,43
4700700003200000006
1,1,2-13,14,14,16,16,18,18,20,22,24
4700700001900000001
41218828002
26,28,30,32,34,34,36,38,38,40,42,44,46
4700700001900000002
48,50,52,54,56,15,17,19,19,21,23,25,25
4700700001900000003
27,29,31,33,35,37,37,39,39,41,43,45,47
4700700001900000004
45,49,51,53,55,57,57
4700700001900000005
2,2,4,4,6,6,8,8,10,10,12,12,12,14
4700700017700000001
41218828010
14,16,16,(18-76),80,80,(82-102)
4700700017700000002
1,1,3,5,5,5,7,7,9,11,11,13,13,13
4700700017700000003
15,15,17,17,(19-25),27,27,(29-93)
4700700017700000004
(2-22),1,3,5,5,7,9,11,11,(13-21)
4700700023200000001
41218828013
20,30,30,30
4700700005700000001
188376
41218862002
1,5,11,12,27,27,28,29,34-38,41-43,2,4
4700700015400000001
188361
41218844001
45-46,57,7,9,11,13,15,17,19,21
4700700015400000002
23,23,48-56,57,58-66
4700700015400000003
1,3,3,5
4700700015400000004
1,2,2,3-9,10,10,11-17,18,18,19,20,20
4700700004100000001
188349
41218808003
21-27,28,28,29-38,39,39,40-47,48,48
4700700004100000002
50-72,73,73,74,74,75-83
4700700004100000003
1,2,2,2,3-5,6,6,8,8,7,9,10,10,11-19
4700700010000000001
188357
41218808004
20,20,21-35,36,36,37-45,46,46,47,48
4700700010000000002
1,2,3,3,3,4,5,5,6-9,10,10,11-13,14
4700700014700000001
41218808008
14,15,16,17,17,18,19,21,21,23,23,25
4700700014700000002
27-29
4700700014700000003
1-3,4,4,5,6,6,8-11,12,12,13,14,14,15
4700700015000000001
41218808009
14,14,16,16,16,17-21,22,22,23-31
4700700015000000002
1,2,2,2,2,3-5,6,6,7,8,8,9,10,11,11
4700700015300000001
41218808010
11,12-15,16,16,17,18,18,18,19,20,20
4700700015300000002
20,21,22,23,23,23,23,24-27,28,28,29
4700700015300000003
28,30-33
4700700015300000004
1,2,2,3,3,3,3,4-18,19,19,20-58
4700700019200000001
41218808012
1,2,3,3,3,3,3,3,3,4,4,5,5,6,6,7
4700700021500000001
41218808013
8,9,10,10,10,10,10,11,11,12-21,22
4700700021500000002
22,23-41
4700700021500000003
1,1,1,2,3,3,4-6,7,7,8-17,18,18,38
4700700022500000001
41218808015
19-37,38,39-71,72,72,73-78,79,79,85
4700700022500000002
80-84,85,85,86-91,92,92,93-110,111
4700700022500000003
111,113-133
4700700022500000004
1,2,2,2,3-25,26,26,27-32,33,33,34-39
4700700009200000001
188355
41218826003
40,40,40,41,42,43,43,44-63,64,64,65
4700700009200000002
66,66,66,67-72,73,73,74,75,75,76,76
4700700009200000003
76,77,77,78-81,82,82,83-84,85,85,94
4700700009200000004
86-93,94,96-109,110,110,112-126
4700700009200000005
1,1,2-18,19,19,20-25,26,26,26,27-48
4700700013000000001
41218826004
49,49,50-53,54,54,55-68,69,69,69,81
4700700013000000002
70-80,81,82-85,86,86,87,88,89,89,90-92
4700700013000000003
93,93,94,95,95,96-100,101,101,102-119
4700700013000000004
120,120,121-138
4700700013000000005
1-6,7,7,8-52,53,53,54-60,61,61,62,63
4700700016900000001
188327
41218820005
63,64-71,72,72,73,74
4700700016900000002
1,1,2,2,2,3-5,6,6,7-17,18,18,19,19
4700700017100000001
41218820006
20-22,23,23,24,25,26,26,27,28,28,28
4700700017100000002
29,30,30,30,31,32,32,33-37,38,38,46
4700700017100000003
39-45,46,47-59,60,60,61-67,68,68,70-76
4700700017100000004
1,1,1,1,2,2,3,4,4,5,6,6,14-17,18
4700700017400000001
188337
41218826006
18,18,19-21,22,22
4700700017400000002
3403200100000450001
3403200100000520001
3403200100000930001
3403200100000930002
(71-117)
3403200100001190005
(60-86)
3403200100001190006
3403200100000830003
3401000100000500001
3401000100000500002
3500600002200000001
162394
3526
19214884001
3500600002800000001
162343
3500600043600000001
162393
3500600044100000001
3500600016900000001
162353
19214832001
3500600017400000001
3500600017600000001
3500600001000000001
3500600017800000001
3500600017700000001
3500600017900000001
3500600013100000001
3500600001500000001
162362
19214836001
3500600001900000001
162375
19214868001
3500600030500000001
162350
19214856001
3501300012200000001
161406
3512
19230836001
3501300011500000001
161405
3501300011600000001
3501300001500000001
161425
19230856001
3700700200000040001
155830
24211504000
3700700200000040002
155831
3700700200000090001
3700700200000090002
3700700200000150001
3700700200000150002
3700700200000320001
19,21,23,25-999
3700700200000320002
3700700200000890001
3700700200000890002
3700700200001150001
3700700200001150002
3700700200001200001
18,20,22-999
3700700200001200002
6400000100014000003
6400000100014000004
243,239,239,239
6400000100001480015
239,(247-271),220
6400000100001480016
(211-237)
6600002300002010003
1-31,33,35
6600002300002830001
2-7,(9-37)
6601900003400020001
65232000000
1,(8-36),38-999
6601900003400020002
199,201,201,245,245
3600200000100500003
3600200000100840001
7-48
3600200000100840002
5604600000100430001
462731
5628
53217808001
78-242
5604600000100430002
462734
5604600000100230001
51-179
5604600000100230002
2,2,2,2,2,2,2
6100000100018690004
1,2,2,2,2,2,2,2,2,2,2,2
6100000100018690001
(32-44),25-27
4200001600000620003
14,16,17
4200001600000660001
4200001600000660002
(1-9),(2-32)
4200000500000300001
652711
(13-41),(34-44)
4200000500000300002
4200000500010010001
(132-257)
4200000500010010002
652727
4200000500009890001
(19-41),(18-30)
4200000500009890002
4200000500009890003
4200000500003310001
1-22,24,26-999
4200000500003310002
4200000500003370001
13-27
4200000500003370002
4200000500003540001
(11-25),(18-30)
4200000500003540002
4200000500003920001
4200000500003920002
4200000500003920003
4200000500005980001
20-23
4200000500005980002
4200000500006700001
4200000500006700002
4200000500000030001
4200000500000030002
(65-999),(44-999)
5601200100000840001
461040
5603
53412000000
5601200100000840002
461047
5601200100000850001
(59-999),(70-999)
5601200100000850002
5601200100000860001
(49-999),(58-999)
5601200100000860002
5601200100000870001
5601200100000870002
5601200100001720001
(41-999),(28-999)
5601200100001720002
5601200100000830001
5601200100000830002
5601200100001680001
5601200100001680002
461046
5601200100000340001
461041
(69-999),(78-999)
5601200100000340002
461045
5601200100000180001
(53-999),(54-999)
5601200100000180002
461048
(1-91),(108-999)
5601200100000320001
5601200100000430001
5601200100000430002
5601200100001390001
461043
5601200100001390002
461049
153
5601200100000230001
1-152,154-999
5601200100000230002
62,65,(76-82)
5601200100000030001
1-61,63,64,66-75,(77-81),83-999
5601200100000030002
5601200100001290001
461042
5601200100001290002
5601200100001270001
5601200100001270002
5601200100001280001
(37-999),(34-999)
5601200100001280002
5601200100001260001
5601200100001260002
5601200100000210001
(39-999),(56-999)
5601200100000210002
5601200100000170001
5601200100000170002
5601200100000160001
(53-999),(56-999)
5601200100000160002
5601200100000200001
5601200100000200002
5601200100000190001
5601200100000190002
5601200100001480001
5601200100001480002
(1-39),(2-152)
5601200100001400001
(41-999),(154-999)
5601200100001400002
(1-155),(2-106)
5601200100001410001
(157-999),(108-999)
5601200100001410002
18,26,27,30
5601200100001620001
1-17,19-25,28,29,31-999
5601200100001620002
1-4,8,11-14,16,17-20,23,28,30,31
2400001200003680001
15,32,32 ,33,33 ,34,35,37,39,40
2400001200003680002
25-30,39-42,43
2400001200003620001
1-12,16-22,24,31-35,36-38
2400001200003620002
83,91,98,99
2400001200001070001
1-82,84-88
2400001200001070002
(61-79),(56-78)
2400001200001100001
1,2,5,(15-59),(6-54)
2400001200001100002
2400001200001500002
4 ,31,44
2400001200001660001
1,7,9
2400001200001660002
(44-60),(81-95)
2400001200001700001
2400001200001700002
2700000100005160001
(23-999),(22-999)
2700000100005160002
4700507301500000001
7102400027700070001
301212
70248884009
1,(2-6),34,50,41
5500000100012610004
5001100000600000001
141654
46221837009
5001100000900000001
141656
46221858015
5001100001500000001
141620
46221819003
5001100001600000001
141650
46221822010
5001100001700000001
141640
46221831003
5001100001900000001
141633
46221852007
5001100002200000001
46221837010
5001100002600000001
46221873007
5001100002700000001
46221837005
5001100003200000001
141644
46221846021
5001100003300000001
46221843005
5001100003500000001
141651
46221807005
5001100003600000001
46221846009
5001100025800000001
141625
46221843003
5001100004100000001
46221807001
5001100026300000001
46221822019
5001100006000000001
141641
46221816012
5001100006600000001
46221822003
5001100006900000001
46221858013
5001100007200000001
46221858001
5001100007600000001
46221822018
5001100008200000001
46221837008
5001100008300000001
46221852010
5001100008500000001
46221816001
5001100008700000001
46221819012
5001100009200000001
46221819016
5001100009400000001
46221831014
5001100009600000001
46221858005
5001100009800000001
46221822014
5001100025100000001
46221819011
5001100010100000001
46221843004
5001100025500000001
46221822004
5001100025000000001
141663
46221819010
5001100010700000001
46221807010
5001100010900000001
141621
46221870001
5001100011000000001
46221819015
5001100011100000001
46221843006
5001100011500000001
46221858011
5001100011700000001
46221822016
5001100011900000001
46221846013
5001100011800000001
46221819001
5001100012800000001
46221846015
5001100013000000001
46221825001
5001100013100000001
46221819002
5001100013400000001
46221846003
5001100013200000001
46221858007
5001100013700000001
46221819006
5001100013800000001
46221822006
5001100013900000001
46221831012
5001100024300000001
141624
46221829001
5001100014100000001
46221846012
5001100014200000001
46221825003
5001100014600000001
46221858012
5001100014900000001
46221831001
5001100015100000001
141623
46221834001
5001100015300000001
46221831010
5001100015500000001
46221846005
5001100015700000001
46221837006
5001100026800000001
46221858003
5001100016100000001
46221837001
5001100016400000001
46221819018
5001100016500000001
46221807015
5001100016600000001
46221846010
5001100017000000001
46221873005
5001100017400000001
46221831002
5001100026700000001
46221858002
5001100017800000001
46221819008
5001100019900000001
46221810008
5001100018000000001
46221843001
5001100018100000001
46221846004
5001100018500000001
141631
46221554000
5001100018600000001
141652
46221807017
5001100018700000001
141632
46221873009
5001100018800000001
46221843007
5001100019100000001
46221807026
5001100026100000001
46221843012
5001100019600000001
46221846001
5001100019800000001
46221837004
5001100020000000001
46221816008
5001100020100000001
46221846018
5001100027400000001
46221825007
5001100020400000001
141667
46221852001
5001100020500000001
46221837007
5001100020600000001
46221858010
5001100021000000001
46221819007
5001100021100000001
46221816003
5001100021400000001
46221858004
5001100021500000001
46221816004
5001100026400000001
46221846011
5001100021700000001
46221843008
5001100021900000001
46221822002
5001100026600000001
46221852012
5001100022000000001
46221837002
5001100022200000001
46221822015
5001100022300000001
46221846022
5001100022400000001
46221819004
5001100023100000001
46221807021
5001100023300000001
46221834009
5001100023600000001
141642
46221810001
5001100023700000001
46221822001
5001100023800000001
46221810003
5001100026000000001
46221843011
5001100019400000001
46221819014
5001100022100000001
46221822017
5001100005700000001
46221822011
(12-22),11,13,15
5000000300000060002
(4-8),
5000000300000740001
66,66 ,66£,(68-70),72,80¡
3400000100023130003
(82-90),66¡
3400000100023130004
3400000100004800005
400042
89,93,95 ,97
3400000100100220001
400122
18401673000
66,72,78,81,86,(103-105),121,(125-133)
3400000100100220002
161à,161á,161ä,(169-171),177 ,183¡
3400000100100220004
69/1,69/2,69/3,69/5,69/6,69 ,(71-111)
3400000100004780007
(131-153),(156-162),140,142,178,180
3400000100004780008
5,69/4,138
3400000100004780009
17,23 ,23¡
3400000100005790005
(170-174),(175-193)
3400000100029520002
3400000100029520003
400089
(37-45),47,49,14 ,16¡
3400000100006040005
3400000100024750003
(28-36),(48-82)
3400000100007240004
3400000100008220001
28,28 
3400000100008220002
(73-125),(133-149),118,128,(14-30)
3400000100007420005
(26-72)
3400000100007730003
3400000100007540003
1,2,7-999
3400400001800310002
70 
3400000100023030004
3400000100002030004
3400000100002030005
3400000100002550004
3400000100002340003
3401100100001240001
3401100100000350001
3401100100000890001
7500000100000000001
7500000200000000001
672900
7524
7533
76585000000
7500000300000000001
672901
7500100007800000001
76250890002
7500100000200000001
672540
76250000000
7500100000300000001
76250873002
7500100000400000001
76250885001
7500100000500000001
672530
76250554000
7500100000600000001
672516
76250810001
7500100000700000001
672513
76250815002
7500100000800000001
672515
76250890003
7500400100000000001
673450
7527
7528
76405000000
7500500100000000001
674600
7505
7529
76407000000
7501100100000000001
674670
7530
76410000000
7501400100000000001
673732
7512
76226501000
7501500100000000001
673400
7513
76228501000
7501900100000000001
673000
7538
7531
76415000000
7502100100000000001
673500
7519
76240501000
7502500100000000001
673204
76247501000
7502800100000000001
673370
76254501000
7500100000900000001
76250825002
7500100001000000001
76250815001
7500100001100000001
76250800000
7500100001200000001
672550
76250880002
7500100001300000001
672521
76250820001
7500100001400000001
76250835002
7500100001600000001
672541
76250825001
7500100001700000001
76250873003
7500100001800000001
674026
76250860002
7500100001900000001
672512
76250875002
7500100002100000001
672520
76250830001
7500100002200000001
76250885002
7500100002300000001
76250865002
7500100002400000001
672522
76250835001
7500100002500000001
76250810002
7500100002600000001
7500100002700000001
76250875003
7500100002800000001
76250840001
7500100002900000001
76250840002
7500100003000000001
672572
76250558000
7500100003100000001
672527
76250850002
7500100003200000001
672525
7500100003400000001
672545
76250845001
7500100003600000001
672524
76250850001
7500100003700000001
672535
76250855001
7500100004000000001
7500100004200000001
76250815003
7500100004400000001
672526
76250860001
7500100004500000001
672570
7500100004600000001
76250865001
7500100004700000001
672544
76250870001
7500100004800000001
76250890004
7500100004900000001
76250885003
7500100005000000001
7500100005100000001
7500100005200000001
76250873001
7500100005300000001
76250875001
7500100005400000001
76250880001
7500100005500000001
674526
76250860004
7500100005600000001
674544
76250870002
7500100005700000001
76250865003
7500100005800000001
76250885004
7500100005900000001
76250880003
7500100006000000001
76250887001
7500100006100000001
76250850003
7500100006200000001
76250840003
7500100006400000001
76250810003
7500100006500000001
672514
76250890001
7500100006600000001
672560
76250564000
7500100006700000001
76250880004
7500100007000000001
7500100007300000001
7500100007400000001
7500100007700000001
7500100007900000001
76244833001
7500200000100000001
674230
7515
7501
76203811001
7500200000300000001
674235
76203820001
7500200000400000001
674221
76203880002
7500200000500000001
674234
76203827001
7500200000600000001
674243
76203830001
7500200000700000001
674233
76203840001
7500200000800000001
674245
76203850002
7500200000900000001
76203850001
7500200001000000001
674242
76203860001
7500200001100000001
674232
76203870002
7500200001200000001
674240
76203865001
7500200001300000001
674241
76203868001
7500200001500000001
76203880001
7500200001600000001
76203870001
7500200001700000001
674244
76203890001
7500300000100000001
674640
7502
76204812001
7500300000300000001
76204804002
7500300000400000001
674643
76204816001
7500300000500000001
674648
76204870001
7500300000600000001
674632
76204818001
7500300000700000001
674635
76204820001
7500300000900000001
76204812002
7500300001000000001
76204870002
7500300001100000001
76204856002
7500300001200000001
76204858001
7500300001300000001
76204823001
7500300001400000001
674644
76204830001
7500300001500000001
76204832001
7500300001600000001
76204836001
7500300001700000001
674634
76204840001
7500300001800000001
674631
76204843001
7500300002000000001
674646
76204847001
7500300002100000001
674637
76204850001
7500300002200000001
674638
76204804001
7500300002300000001
674636
76204856001
7500300002400000001
76204840002
7500300002500000001
76204860001
7500300002600000001
76204804003
7500300002700000001
674647
76204865001
7500300002800000001
674645
76204872001
7500300002900000001
76204872002
7500300003100000001
76204816002
7500400000200000001
673445
76206815002
7500400000300000001
673431
76206835002
7500400000400000001
673440
76206840002
7500400000500000001
673446
76206840003
7500400000700000001
76206830001
7500400000800000001
76206815003
7500400000900000001
673433
76206845002
7500400001000000001
673441
76206850002
7500400001200000001
673448
76206830003
7500400001300000001
673444
76206810001
7500400001400000001
76206815004
7500400001500000001
76206815001
7500400001600000001
673443
76206805001
7500400001700000001
76206810002
7500400001800000001
76206850003
7500400001900000001
76206840005
7500400002100000001
673432
76206825001
7500400002300000001
76206825002
7500400002400000001
76206840006
7500400002600000001
76206840001
7500400002700000001
76206830004
7500400002800000001
673447
76206800000
7500400003100000001
76206850001
7500400003400000001
673442
76206840007
7500400003600000001
76206810004
7500400003900000001
76206805002
7500400004000000001
76206840004
7500400004100000001
673449
7500400004200000001
76206835001
7500400004300000001
76206825003
7500400004400000001
76206845001
7500400100800000001
7500500000300000001
674621
76209876001
7500500000400000001
674616
76209880001
7500500000500000001
674606
76209852001
7500500000600000001
674607
76209554000
7500500000700000001
674613
76209868001
7500500000800000001
674623
76209808001
7500500001000000001
674622
76209824001
7500500001100000001
674625
76209836001
7500500001200000001
674624
76209860001
7500500001300000001
76209862001
7500500001400000001
674617
76209864001
7500500001500000001
674614
76209872001
7500500001600000001
674615
76209888001
7500500002200000001
76209820001
7500500002500000001
76209840003
7500500003000000001
674627
76209814001
7500500003100000001
76209840001
7500500100200000001
674602
7500500100300000001
674603
7500500100400000001
7500500100500000001
76407000001
7500600000100000001
673630
7504
76210809001
7500600000300000001
673645
76210826001
7500600000400000001
76210826003
7500600000500000001
76210809003
7500600000600000001
76210809002
7500600000700000001
673633
76210809006
7500600000800000001
673634
76210833001
7500600000900000001
673635
76210820002
7500600001000000001
76210820001
7500600001100000001
673640
76210830001
7500600001200000001
76210830002
7500600001300000001
673641
76210805001
7500600001400000001
76210805003
7500600001500000001
76210805004
7500600001600000001
673642
76210803004
7500600001700000001
76210803001
7500600001800000001
76210812001
7500600001900000001
673646
76210818002
7500600002000000001
76210818001
7500600002100000001
76210803002
7500600002200000001
76210803003
7500600002300000001
673632
76210809004
7500600002500000001
76210805002
7500600002600000001
76210809005
7500600002800000001
76210826002
7500700000100000001
674650
76212551000
7500700000300000001
674661
76212805001
7500700000500000001
674686
76212820001
7500700000600000001
674668
76212845001
7500700000700000001
674658
76212815001
7500700000800000001
674660
76212825001
7500700000900000001
674657
76212855001
7500700001100000001
76212551001
7500700001400000001
674662
76212810000
7500700001900000001
674666
76212820003
7500700002200000001
76212820002
7500800000100000001
674150
7506
76215844001
7500800000300000001
674156
76215805001
7500800000400000001
674170
76215807001
7500800000600000001
674159
76215556000
7500800000700000001
76215822001
7500800000900000001
76215844003
7500800001000000001
674153
76215556001
7500800002400000001
674160
76215807003
7500800004500000001
76215833001
7500900000100000001
674340
7507
76218833001
7500900000200000001
674344
76218811001
7500900000300000001
76218814001
7500900000400000001
674355
76218822001
7500900000500000001
674350
76218000002
7500900000700000001
674347
76218844001
7500900000800000001
674342
76218855001
7500900000900000001
674357
76218866001
7500900001000000001
674349
76218877001
7500900001100000001
674345
76218888001
7500900001200000001
674359
76218890001
7501000000100000001
673300
7508
76220551000
7501000000200000001
673333
76220805001
7501000000300000001
76220830002
7501000000400000001
673320
76220809001
7501000000500000001
673314
76220840003
7501000000600000001
673310
76220553000
7501000000700000001
673325
76220820001
7501000000900000001
76220835002
7501000001000000001
673315
76220825001
7501000001100000001
673332
76220830001
7501000001200000001
76220557001
7501000001400000001
673327
76220850002
7501000001500000001
76220557000
7501000001600000001
673331
76220835001
7501000001700000001
673336
76220840001
7501000001800000001
673326
76220845001
7501000002100000001
76220835003
7501000002200000001
76220830003
7501000002300000001
673335
76220855002
7501000002600000001
76220805003
7501000002700000001
76220820003
7501000002800000001
76220840002
7501000002900000001
76220830004
7501000003000000001
76220850001
7501000003100000001
76220855001
7501000003200000001
76220830005
7501000003600000001
76220850003
7501100000200000001
674695
76221850001
7501100000300000001
674689
76221830001
7501100000400000001
674690
76221850002
7501100000500000001
674683
76221820001
7501100000600000001
674687
76221808001
7501100000700000001
76221824001
7501100000800000001
674697
76221845001
7501100000900000001
674693
76221827001
7501100001000000001
674688
76221834002
7501100001100000001
674680
76221802001
7501100001200000001
674698
76221834001
7501100001300000001
76221827000
7501100001400000001
674684
7501100001500000001
674674
76221800000
7501100001700000001
76221802002
7501100001800000001
76221845002
7501200000100000001
673060
7509
76222845001
7501200000200000001
673050
76222810002
7501200000300000001
673054
76222805001
7501200000400000001
76222810001
7501200000500000001
673075
76222875002
7501200000600000001
673073
76222835002
7501200000700000001
673051
76222815001
7501200000800000001
673072
76222840002
7501200000900000001
76222840003
7501200001000000001
76222875003
7501200001100000001
673052
76222825002
7501200001200000001
76222840004
7501200001300000001
76222825001
7501200001500000001
76222815002
7501200001600000001
76222805002
7501200001700000001
673056
76222830001
7501200001800000001
76222830004
7501200001900000001
76222835001
7501200002000000001
76222875004
7501200002100000001
76222870001
7501200002200000001
76222840001
7501200002300000001
76222825003
7501200002400000001
76222840005
7501200002600000001
673071
76222850001
7501200002800000001
673078
76222855001
7501200003000000001
76222815003
7501200003100000001
76222805003
7501200003200000001
76222835003
7501200003300000001
76222875005
7501200003400000001
76222825004
7501200003500000001
76222875006
7501200003600000001
76222855002
7501200003700000001
673055
76222860001
7501200003800000001
76222860002
7501200003900000001
76222875007
7501200004000000001
76222835004
7501200004200000001
76222830005
7501200004300000001
76222875001
7501200004400000001
673074
76222880001
7501200004500000001
76222855003
7501200004600000001
76222815004
7501200004700000001
76222875009
7501200004800000001
76222875008
7501200004900000001
673053
76222820002
7501300000100000001
674250
7510
76224825001
7501300000300000001
674255
76224805001
7501300000400000001
674267
76224845001
7501300000500000001
674261
76224830001
7501300000600000001
674262
76224820001
7501300000700000001
76224855001
7501300000800000001
674254
76224810001
7501300000900000001
674268
76224840001
7501300001000000001
674263
76224835001
7501300001100000001
674265
76224815001
7501300001200000001
674260
76224853001
7501300001300000001
76224851001
7501300001400000001
76224850001
7501300001500000001
674266
76224852001
7501300001600000001
76224810002
7501300001700000001
76224815002
7501300001800000001
76224840002
7501300002000000001
76224851002
7501300002100000001
76224851003
7501300002200000001
76224855002
7501300002300000001
76224800000
7501300002400000001
7501300002500000001
7501300002600000001
7501300002700000001
7501300002800000001
7501300002900000001
7501300003000000001
76224850002
7501400000200000001
673775
76226554000
7501400000300000001
673767
76226808002
7501400000400000001
673771
76226501004
7501400000600000001
76226554002
7501400000700000001
673750
76226562001
7501400000800000001
673742
76226556000
7501400000900000001
673740
76226810002
7501400001000000001
76226554003
7501400001100000001
673754
76226558000
7501400001300000001
76226562003
7501400001400000001
76226562004
7501400001500000001
673741
76226560000
7501400001600000001
76226554004
7501400001800000001
76226562000
7501400002000000001
76226554006
7501400002200000001
76226810003
7501400002300000001
673730
76226501002
7501400002400000001
76226554007
7501400002600000001
76226501003
7501400002700000001
76226810001
7501400002800000001
673765
76226808000
7501400002900000001
76226808004
7501400003400000001
76226501005
7501400003500000001
76226808003
7501400003700000001
693775
76226554012
7501400004200000001
76226554005
7501400004500000001
76226554008
7501400004600000001
76226554009
7501400004700000001
76226810004
7501400004900000001
7501400005000000001
76226800000
7501400005100000001
7501400005200000001
673496
7501400005300000001
673497
7501400005700000001
76226556001
7501400005800000001
673552
7501400005900000001
76226554010
7501400006000000001
7501400100100000001
7501500000200000001
673410
76228553000
7501500000400000001
673427
76228830002
7501500000500000001
76228815003
7501500000600000001
673426
76228865003
7501500000700000001
76228870002
7501500000800000001
76228845002
7501500000900000001
76228501001
7501500001000000001
673422
76228800000
7501500001100000001
673416
76228850000
7501500001300000001
673421
76228810003
7501500001400000001
76228825003
7501500001500000001
673411
76228805001
7501500001600000001
76228810001
7501500001800000001
76228815005
7501500001900000001
673423
76228825001
7501500002000000001
76228820001
7501500002100000001
76228830001
7501500002200000001
673424
76228835001
7501500002300000001
76228825004
7501500002400000001
673413
76228553001
7501500002500000001
673414
76228855001
7501500002600000001
673425
76228860001
7501500002700000001
76228865001
7501500002900000001
76228870005
7501500003000000001
76228845003
7501500003100000001
76228553002
7501500003400000001
76228825002
7501500004200000001
7501500004300000001
76228805002
7501500005000000001
76228815001
7501500005100000001
673428
76228845001
7501500005300000001
7501500005400000001
673412
76228870001
7501500005500000001
7501500005600000001
76228865002
7501500005700000001
76228810002
7501500005800000001
7501500005900000001
76228850001
7501500006100000001
76228870004
7501600000100000001
674370
7514
76230845001
7501600000200000001
674382
76230805001
7501600000300000001
76230830002
7501600000400000001
674364
76230800000
7501600000500000001
674392
76230810001
7501600000800000001
76230820001
7501600000900000001
674383
76230825001
7501600001000000001
76230826001
7501600001100000001
76230805002
7501600001200000001
76230810002
7501600001300000001
674391
76230830001
7501600001400000001
674381
76230835001
7501600001500000001
674363
76230840001
7501600001800000001
76230810003
7501600001900000001
76230805003
7501600002000000001
76230865002
7501600002100000001
674373
76230855001
7501600002200000001
76230815003
7501600002300000001
674366
76230860001
7501600002400000001
76230865001
7501600002500000001
674384
76230815001
7501600002600000001
76230845000
7501600002700000001
674380
76230850001
7501600002800000001
674362
76230870001
7501600002900000001
76230815002
7501700000100000001
674500
76232551000
7501700000300000001
674520
76232570000
7501700000400000001
674516
76232835001
7501700000500000001
674517
76232808001
7501700000600000001
674504
76232870001
7501700000700000001
674511
76232845001
7501700000800000001
674534
76232805001
7501700000900000001
674535
76232815001
7501700001000000001
674533
76232855001
7501700001100000001
674532
76232830002
7501700001200000001
76232830001
7501700001300000001
674536
76232825001
7501700001400000001
76232800000
7501700001600000001
674554
76232850001
7501700001700000001
674551
76232810001
7501700001800000001
674553
76232553000
7501700001900000001
674518
76232860001
7501700002000000001
674515
76232857002
7501700002100000001
674550
76232853001
7501700002200000001
674549
76232552000
7501700002300000001
76232551002
7501700002400000001
674501
76232840001
7501700002500000001
76232865001
7501700002600000001
76232815002
7501700002800000001
76232840002
7501700002900000001
76232830003
7501700003000000001
76232810002
7501700003500000001
76232551001
7501700003600000001
76232835002
7501700003900000001
76232857001
7501700004100000001
76232805002
7501700004200000001
76232855002
7501700004300000001
674531
76232830004
7501700004700000001
76232825002
7501700005000000001
76232830005
7501800000100000001
674480
7516
76234845001
7501800000300000001
674470
76234812001
7501800000400000001
76234805004
7501800000500000001
674482
76234805001
7501800000600000001
76234805002
7501800000700000001
76234805003
7501800000800000001
674484
76234825001
7501800000900000001
76234825002
7501800001100000001
674483
76234840002
7501800001200000001
674494
76234810001
7501800001300000001
76234810002
7501800001400000001
674495
76234815001
7501800001500000001
76234815002
7501800001600000001
674491
76234830001
7501800001700000001
674492
76234822001
7501800001800000001
76234800000
7501800001900000001
76234850002
7501800002000000001
76234850003
7501800002100000001
674475
76234835002
7501800002300000001
674485
76234835001
7501800002400000001
674490
76234850001
7501800002500000001
7501800002600000001
7501800002700000001
7501800002800000001
76234840001
7501900000200000001
76236840002
7501900000300000001
673021
76236552000
7501900000400000001
76236806001
7501900000800000001
673030
76236821001
7501900000900000001
673016
76236825001
7501900001000000001
673018
76236830001
7501900001100000001
7501900001300000001
76236850002
7501900001400000001
76236830003
7501900001500000001
673041
76236552001
7501900001600000001
673014
76236840001
7501900001700000001
673015
76236850003
7501900001800000001
76236840003
7501900001900000001
76236556000
7501900002000000001
76236825003
7501900002100000001
76236830004
7501900002200000001
76236850001
7501900002300000001
76236840004
7501900002500000001
673040
76236558000
7501900002600000001
673035
76236855001
7501900002700000001
76236857001
7501900002800000001
673025
76236860001
7501900002900000001
673045
76236870001
7501900003200000001
76236825002
7501900003300000001
76236850004
7501900100300000001
673009
7501900100400000001
7501900100500000001
7502000000100000001
674310
7518
76238551000
7502000000300000001
674331
76238852002
7502000000400000001
674313
76238818001
7502000000500000001
674320
76238554000
7502000000600000001
674321
76238842001
7502000000700000001
674335
76238871001
7502000000800000001
674333
76238852001
7502000000900000001
674315
76238881001
7502000001000000001
76238861003
7502000001100000001
674332
76238861001
7502000001200000001
674319
76238823001
7502000001300000001
674330
76238809001
7502000001400000001
76238881003
7502000001500000001
674312
76238809002
7502000001600000001
674325
76238828001
7502000001700000001
674316
76238857001
7502000001800000001
674314
76238876001
7502000001900000001
76238861004
7502000002000000001
76238881002
7502000002100000001
76238857002
7502000002200000001
76238842002
7502000002300000001
76238800000
7502000002400000001
76238861002
7502100000200000001
673545
76240835000
7502100000300000001
673550
76240830001
7502100000400000001
673542
76240840001
7502100000500000001
673563
76240810001
7502100000700000001
673525
76240820002
7502100000800000001
76240845001
7502100000900000001
673544
76240850001
7502100001000000001
673530
76240554000
7502100001100000001
673551
76240830003
7502100001200000001
76240845003
7502100001300000001
76240845002
7502100001400000001
76240845004
7502100001500000001
76240850003
7502100001600000001
76240830002
7502100001700000001
76240850002
7502100001900000001
76240820001
7502100002000000001
673562
76240556000
7502100002300000001
673555
76240805002
7502100002400000001
76240805000
7502100002500000001
76240810005
7502100002600000001
76240805003
7502100002800000001
76240810002
7502100002900000001
76240805004
7502100003000000001
673561
76240841001
7502100003200000001
76240810003
7502100003300000001
76240554002
7502100003400000001
673510
7502100003700000001
76240815002
7502100003800000001
76240840002
7502100003900000001
76240840003
7502100004100000001
76240820004
7502100004200000001
76240815000
7502100004300000001
76240850004
7502100004400000001
76240855002
7502100004500000001
673560
76240855001
7502100004900000001
7502100005000000001
673526
76240815001
7502100005200000001
76240810004
7502200000100000001
673820
7520
76242000001
7502200000300000001
673840
76242833001
7502200000400000001
673830
76242822001
7502200000500000001
673850
76242811001
7502200000600000001
76242815001
7502200000700000001
76242800000
7502200000900000001
76242815000
7502300000100000001
674100
7521
76244811001
7502300000200000001
674120
76244844002
7502300000300000001
76244844001
7502300000400000001
674110
76244855001
7502300000500000001
76244822001
7502300000600000001
7502300000700000001
76244866001
7502300000800000001
76244888001
7502300000900000001
674125
76244800000
7502300001100000001
674130
76244877001
7502300001200000001
76244877002
7502300001300000001
76244554000
7502300001400000001
7502300001500000001
674123
76244846001
7502300001600000001
76244846005
7502300001700000001
76244846002
7502300001800000001
76244846003
7502300001900000001
76244846006
7502300002000000001
76244846000
7502300002100000001
7502400000100000001
674050
7522
76246850001
7502400000200000001
674062
76246802001
7502400000300000001
76246802002
7502400000400000001
674073
76246840004
7502400000500000001
674061
76246805001
7502400000600000001
674060
76246850003
7502400000800000001
674054
76246553001
7502400000900000001
674065
76246815002
7502400001000000001
674064
76246815001
7502400001100000001
674075
76246830002
7502400001200000001
674063
76246820001
7502400001300000001
76246553000
7502400001400000001
76246800000
7502400001500000001
674055
76246553002
7502400001600000001
674074
76246825001
7502400001700000001
674070
76246830001
7502400001800000001
674071
76246840002
7502400001900000001
76246830003
7502400002000000001
76246840001
7502400002100000001
674053
76246553003
7502400002300000001
674081
76246855001
7502400002400000001
673230
7502400002500000001
674082
76246855002
7502400002600000001
674072
7502400002700000001
76246840003
7502400002800000001
76246815003
7502500000200000001
673200
76247800000
7502500000300000001
673212
76247845002
7502500000400000001
673220
76247840002
7502500000500000001
672250
76247805001
7502500000600000001
673235
76247810001
7502500000700000001
76247830002
7502500000800000001
76247840003
7502500000900000001
76247842000
7502500001000000001
76247501001
7502500001100000001
673225
76247815001
7502500001200000001
673240
76247554001
7502500001300000001
673222
76247820001
7502500001400000001
76247805002
7502500001500000001
673211
76247830001
7502500001600000001
76247554000
7502500001700000001
76247820002
7502500001800000001
76247840004
7502500001900000001
76247840005
7502500002000000001
673250
76247805003
7502500002100000001
76247836001
7502500002200000001
76247554002
7502500002300000001
76247842002
7502500002400000001
76247820005
7502500002500000001
76247840001
7502500002600000001
76247842001
7502500002700000001
76247845001
7502500002800000001
76247820003
7502500003000000001
76247850001
7502500003200000001
7502500003400000001
7502500004400000001
7502500004800000001
76247501002
7502500004900000001
7502600000100000001
673460
7525
76248551000
7502600000300000001
673484
76248850001
7502600000400000001
673486
76248832002
7502600000600000001
673490
76248835001
7502600000700000001
673481
76248870001
7502600000800000001
673482
76248805001
7502600000900000001
673492
76248556000
7502600001000000001
673483
76248845001
7502600001100000001
673488
76248840001
7502600001200000001
76248554000
7502600001300000001
673498
76248558000
7502600001900000001
673470
76248855001
7502600002100000001
673485
76248832001
7502600002400000001
76248845002
7502600002500000001
76248830001
7502600002600000001
673487
76248810001
7502600002700000001
673491
76248556001
7502600002800000001
76248825001
7502600004300000001
76248556002
7502600004400000001
76248800000
7502600004600000001
76248805003
7502600004700000001
7502600005900000001
7502600006900000001
7502600007200000001
76248554002
7502600008700000001
76248830002
7502600009200000001
673475
76248832003
7502600009700000001
76248820001
7502600010300000001
76248835002
7502600010500000001
76248835003
7502600010800000001
76248558002
7502600011300000001
673478
76248860003
7502600011400000001
76248556003
7502600012000000001
76248554001
7502600012300000001
76248558001
7502600012400000001
673471
76248833001
7502600012600000001
76248860001
7502600012700000001
76248855003
7502600012800000001
76248855005
7502700000100000001
673610
7526
76252875001
7502700000200000001
673623
76252860002
7502700000300000001
76252875003
7502700000400000001
673620
76252840002
7502700000500000001
673613
76252810001
7502700000600000001
673621
76252825002
7502700000700000001
76252825001
7502700000800000001
673622
76252880002
7502700000900000001
76252835002
7502700001000000001
76252860003
7502700001100000001
76252840003
7502700001200000001
76252835001
7502700001300000001
76252875000
7502700001400000001
76252860001
7502700001500000001
76252875004
7502700001600000001
76252840001
7502700001700000001
673612
76252845001
7502700001800000001
76252840004
7502700002000000001
76252880003
7502700002100000001
76252845002
7502700002200000001
76252825000
7502700002600000001
76252880001
7502700003700000001
76252845003
7502700004800000001
76252810002
7502800000300000001
673377
76254554000
7502800000400000001
76254850003
7502800000600000001
76254805001
7502800000800000001
76254815001
7502800001000000001
76254835002
7502800001100000001
76254835004
7502800001200000001
673383
76254860001
7502800001400000001
673390
76254558003
7502800001500000001
76254850001
7502800001600000001
76254558000
7502800001700000001
673384
76254845003
7502800001800000001
673376
76254564000
7502800001900000001
76254850002
7502800002000000001
76254501002
7502800002100000001
76254558002
7502800002200000001
673381
76254820001
7502800002300000001
76254835001
7502800002400000001
76254845002
7502800002500000001
673364
76254840001
7502800002600000001
76254845001
7502800003100000001
76254800000
7502800003300000001
76254810003
7502800003500000001
76254860003
7502800003700000001
673365
76254855001
7502800004100000001
76254558001
7502800004600000001
76254860002
7502800004700000001
76254835003
7502800004800000001
76254820002
7502800005100000001
76254805004
7502800005200000001
76254825002
7502800005300000001
76254840002
7502800005400000001
76254810002
7502800005500000001
76254855002
7502800005600000001
76254810001
7502800005700000001
76254815002
7502800005800000001
76254825004
7502800005900000001
76254805002
7502800006000000001
76254805003
7502800006100000001
76254855003
7502800006200000001
76254825001
7502800100500000001
7500100008000000001
76250860003
7500600002900000001
7502700005000000001
76252835003
7500900001300000001
7500900001400000001
7500500052200000001
76209862002
7500500052300000001
674629
76209836002
7500500052400000001
76209000000
7500400004500000001
76206830005
7501500100200000001
7501500100300000001
76228000000
7502100005300000001
76240000000
7502800006600000001
76254000000
7501600003000000001
76230000000
7500100008100000001
7502100005400000001
7500100008200000001
7500100008300000001
5500000104200000001
2400001800000040007
6900300100400000001
171982
28405000003
6900300100200000001
171981
28405000002
6900300034300000001
28204856001
6900300100300000001
28405000004
6900300003600050001
171968
28204804001
6900300003600000001
6900300006600000001
171949
28204808001
6900300010500000001
171963
28204805001
6900300012400000001
171975
28204811001
6900300017600000001
171960
28204819001
6900300021300000001
171962
28204825001
6900300024800000001
171971
28204849040
6900300025100000001
28204808019
6900300025800000001
171952
28204856037
6900300026100000001
171967
28204804023
6900300032000000001
171970
28204849001
6900300032400000001
171961
28204819031
6900300032700000001
171964
28204805036
6900300036000000001
171965
28204825031
6900600002300000001
171733
6919
28210804003
6900600004600000001
171731
28210804005
6900600005800000001
171732
28210804001
6900600016800000001
171724
28210804032
6900600013300000001
28210804035
6900600014500000001
171721
28210804036
6900600023400000001
28210804042
6900600001400000001
28210810032
6900600007400000001
171701
28210813001
6900600021100000001
171704
28210813025
6900600026200000001
171700
28210813049
6900600010300000001
171730
28210819001
6900600001000000001
171735
28210819004
6900600015800000001
28210819029
6900600016300000001
171702
28210820001
6900600017000000001
171713
28210822001
6900600002100000001
28210822003
6900600005700000001
28210822010
6900600016200000001
28210822023
6900600016400000001
28210822024
6900600017100000001
28210820016
6902000000100000001
6902000013500000001
171930
28240828001
6902000019800000001
171911
28240806001
6902000027500000001
171918
28240808001
6902000023200000001
171935
28240824001
6902000019300000001
28240806016
6901800000100000001
171890
6930
28236812001
6901800007700000001
28236805014
6901800009300000001
28236805016
6901800006300000001
171888
28236805021
6901800007000000001
171889
28236805033
6901800004400000001
171897
28236805057
6901800003000000001
171896
28236812016
6901800005600000001
28236812017
6901800014500000001
28236812020
6901800014700000001
171895
28236812003
6901800003300000001
171885
28236812005
6901800011600000001
28236812010
6901800001800000001
171893
28236813007
6901800002500000001
28236813008
6901800003200000001
28236813009
6901800003900000001
28236813002
6901800006200000001
171881
28236813001
6901800010600000001
171883
28236813023
6901800000400000001
171894
28236821011
6901800004000000001
171884
28236821027
6901800004900000001
28236821023
6901800007800000001
28236821029
6901800006600000001
28236821002
6901800009600000001
28236821001
6902800000100000001
171750
6938
28249551000
6902800001100000001
171762
28249804023
6902800000900000001
171752
28249815001
6902800000800000001
171758
28249814001
6903000000100000001
171450
6940
28251551000
6903000000200000001
171452
28251804001
6903000001200000001
171441
28251812001
6903000012500000001
171445
28251822001
6903000011200000001
28251822012
6902100000100000001
171680
6933
28242551000
6901100304300000001
171555
28222834042
6901100303500000001
28222834033
6901100300800000001
28222834009
6901100305100000001
171554
28222834051
6901100305800000001
28222834058
6901100305900000001
28222834059
6901100304800000001
28222834048
6901100305600000001
28222834056
6901100600300000001
171581
28222802001
6901100604000000001
171559
28222802041
6901100602900000001
171561
28222802031
6901100602000000001
171556
28222802016
6901100605800000001
171571
28222802060
6901100600800000001
28222802006
6901100602500000001
28222802026
6901100606300000001
28222802065
6901100603500000001
28222802028
6901100602600000001
28222802027
6901100601200000001
28222802013
6901100606700000001
28222802054
6901100603700000001
171590
28222802038
6901102001200000001
171569
28222838012
6901102008100000001
171551
28222838081
6901102002800000001
171553
28222838025
6901102004500000001
171585
28222838046
6901102005600000001
171552
28222838054
6901102004800000001
28222838049
6901102004900000001
28222838039
6901102007200000001
28222838073
6901102002100000001
28222838021
6901102000100000001
171568
28222838001
6901102005100000001
28222838051
6901102009400000001
171567
28222838077
6901102008300000001
28222838084
6901101307900000001
28222824079
6901101304100000001
171564
28222824037
6901101308400000001
171591
28222824073
6901101306300000001
171562
28222824062
6901101301400000001
28222824014
6901101307300000001
171566
28222824071
6901101306700000001
28222000000
6901200201100000001
28224804011
6901200204200000001
171616
28224804035
6901200303300000001
171628
28224806051
6901200304400000001
28224806044
6901200500300000001
171622
28224812001
6901200700900000001
171611
28224816006
6901200802900000001
171638
28224819030
6901200802600000001
171636
28224819027
6901200803700000001
28224819039
6901200803900000001
28224819025
3500100037800050001
1-7,9,11,12,14,16,18,20,22,24,26-48
2400000200000040001
663981
2448
2445
04407000000
50-58,60,62,66,68,70,81,83,85,87,89,91
2400000200000040002
74,93,95,95,97
2400000200000040003
663980
1,3,5-14,16,18,20,22,24
2400000200000100001
28,30,30,32
2400000200000100002
1,2,4,6-22,24,26,27,28,30-38,40,46,48
2400000200000290001
47,49-64
2400000200000290002
1-43,45,47-63,65-70,72,74
2400000200000460001
76,82-88,97,99-102,104,106,108,110
2400000200000460002
112,114
2400000200000460003
1-19,21,23,25,27,29,31,33-35,37,39,40
2400000200000660001
44-48,50,52,54,56
2400000200000660002
53,55,55,55,57,58,60,62,64,66,68,70,78
2400000200000660003
1,2,4-7,9,11,13,16,22,28,30,32,33,33
2403301500001130001
663960
04247501000
34-36,38-42,44,46,47,51-66,68,70,74,76
2403301500001130002
78,81,83,102,104
2403301500001130003
69,71,73,75,77,79
2403301500001130004
663961
5900000100002240004
5900000200002630006
(157-999)
3900000100004440005
3500100024900000001
160542
19220854022
3500100038900000001
160022
19220884016
3500100005500000001
19220884025
3500100038400000001
19220884006
3500100039200000001
19220884023
3500100046200000001
19220884007
3500100039500000001
19220884037
3500100039300000001
19220884033
3500100078900000001
19220884078
3500100056100000001
19220884017
3500100039700000001
160021
19220884046
3500100091000000001
160013
19220884028
3500100067000000001
19220884073
5500000101100000001
7400000900007220001
(3-21),(12-41)
7400000900006740001
7400000100011520003
7400000100003490003
7400000100011800003
7600000100012530001
7600000100012530002
8¡
7600000100003090001
14 
7600000100005750001
7600000100001070001
7600000100002800001
7600000100011270001
2/17
7600000100001180001
61/10
7600000100000300001
73 
7600000100001470003
7600000100003580001
3ª3
7600000100002730001
7600000100011430003
7600000100000610001
7600000100012220001
150066
15,15 ,15¡
7600000100003810001
7600000100009280001
6,6 
7600000100001700001
7600000100012510001
8,8 ,8¡
7600000100010110001
16,16 
7600000100008850001
2200400000100380001
658510
2233
01203807001
2200400000100390001
2200400000100400001
2200400000100410001
2200400000100420001
2200400000100430001
2200400000100050001
2200400000100060001
2200400000100440001
2200400000100070001
2200400000100090001
2200400000100120001
2200400000100100001
2200400000100110001
2200400000100130001
2200400000100160001
2200400000100170001
2200400000100140001
2200400000100150001
2200400000100180001
2200400000100200001
2200400000100190001
2200400000100210001
2200400000100230001
2200400000100220001
2200400000100240001
2200400000100310001
2200400000100300001
2200400000100450001
2200400000100250001
2200400000100290001
2200400000100320001
2200400000100260001
2200400000100270001
2200400000100330001
2200400000100340001
2200400000100350001
2200400000100360001
2200400000100370001
2200400000200080001
658507
01203816001
2200400000200170001
2200400000200160001
2200400000200180001
2200400000200120001
2200400000200050001
2200400000200130001
2200400000200090001
2200400000200010001
2200400000200070001
2200400000200190001
2200400000200150001
2200400000200060001
2200400000200020001
2200400000200030001
2200400000200110001
2200400000200100001
2200400000200040001
2200400000300080001
658505
01203819001
2200400000300050001
2200400000300060001
2200400000300130001
2200400000300140001
2200400000300010001
2200400000300030001
2200400000300020001
2200400000300110001
2200400000300170001
2200400000300160001
2200400000300070001
2200400000300090001
2200400000300100001
2200400000300150001
2200400000300120001
2200400000300180001
2200400000300040001
2200400000400030001
658519
01203869002
2200400000400020001
2200400000400010001
2200400000600110001
658508
01203834001
2200400000600060001
2200400000600020001
2200400000600130001
2200400000600040001
2200400000600030001
2200400000600100001
2200400000600070001
2200400000600090001
2200400000600010001
2200400000600120001
2200400000600050001
2200400000600080001
2200400000700080001
658501
01203837001
2200400000700030001
2200400000700100001
2200400000700070001
2200400000700010001
2200400000700090001
2200400000700020001
2200400000700110001
2200400000700130001
2200400000700120001
2200400000700040001
2200400000700050001
2200400000700060001
2200400000800010001
658502
01203837002
2200400000800020001
2200400000900020001
658514
01203855001
2200400000900080001
2200400000900070001
2200400000900060001
2200400000900030001
2200400000900050001
2200400000900010001
2200400000900040001
2200400001000100001
658516
01203858001
2200400001000030001
2200400001000050001
2200400001000110001
2200400001000090001
2200400001000040001
2200400001000080001
2200400001000020001
2200400001000010001
2200400001000070001
2200400001000060001
2200400001100020001
658513
01203837003
2200400001100030001
2200400001100010001
2200400001200020001
01203869001
2200400001200010001
2200400001200100001
2200400001200040001
2200400001200070001
2200400001200060001
2200400001200030001
2200400001200090001
2200400001200050001
2200400001200080001
2200400001300020001
01203837004
2200400001300010001
2200400001300030001
2200400001400010001
658515
01203855002
2200400001400020001
2200400001500050001
658503
01203880001
2200400001500010001
2200400001500080001
2200400001500030001
2200400001500070001
2200400001500040001
2200400001500060001
2200400001600010001
658517
01203858002
2200400001600020001
2200400001600030001
2201800001000010001
658718
2247
01216813004
2201800001000020001
34ª2áâà5,34ª2áâà6,34ª2áâà7,34ª2áâà8,36
7700000000000020071
2áâà34,6/10,7,8,15
7700000000000110006
177áâà6,177áâà1,180,181ª1,183ª2
7700000000000130123
183ª2áâà1,183/36,201áâà1
7700000000000130124
7700000000000240005
7700000000000510010
5áâà17,5áâà18,5áâà19,5áâà20,5áâà23
7700000000000580007
5áâà24,5áâà25,5áâà26,5áâà27,6,8,14
7700000000000580008
7700000000000580009
41áâà14
7700000000000650029
106ª1áâà13,106ª2,106ª3,106ª4,106ª4áâà1
7700000000000710048
27/12
7700000000000720008
49ª4,51,53,53áâà1,53áâà2,53ª2,53ª2áâà4
7700000000000760085
57/2áâà2,63,65,65ª2
7700000000000760086
7700000000001560049
1ª12,1ª13,1ª18,1ª19,1ª20,1ª21,1ª22
7700000000001720016
1ª24,1ª25,1ª26,1ª27,1ª31,1ª32,1ª36
7700000000001720017
1ª36,1ª36,1ª37,2,2áâà1,2áâà1,2áâà2
7700000000001720018
2áâà3,2áâà4,3,4,5,6,6,7,9,10,11
7700000000001720019
11áâà1,12,13,14,15,15áâà1,16áâà1
7700000000001720020
7700000000001720021
17áâà1,17áâà2,17áâà3,18,19áâà1,19áâà2
7700000000001720022
7700000000001720023
55áâà3
7700000000001780014
15áâà11,15áâà12,15áâà13,15áâà14
7700000000001820007
15áâà15,15áâà18,15áâà19,15áâà20
7700000000001820008
15áâà22,16,18,18,20,20,52áâà7
7700000000001820009
53,55,57
7700000000001850009
20áâà6,24áâà2
7700000000001880003
14áâà5,16
7700000000001960004
27áâà2,29,29áâà2,29áâà4
7700000000001980009
4,4,4,5,6,6áâà2,6áâà1,8
7700000000002130004
21áâà3,21áâà4,21áâà5,21áâà6,21áâà7,27
7700000000002240019
7700000000002240020
27áâà1,27áâà2,27áâà4,27áâà5
7700000000002270010
6áâà4,6áâà7,6áâà8,6áâà20
7700000000002410053
22áâà7,22áâà8,22áâà12
7700000000002470022
1,1/10
7700000000002700016
20,21,22,23ª1,24,26,26ª1,30,32
7700000000003330010
108áâà14,108áâà15,108áâà16,108áâà17
7700000000003350209
108áâà18,108áâà19,108áâà20,108áâà21
7700000000003350210
108áâà22,108áâà23,108áâà24,108áâà25
7700000000003350212
7700000000003370034
3áâà1,3áâà2,4,4áâà1,5,6,6,7,9,10
7700000000003460003
10áâà1,12,14,14áâà1,21,22
7700000000003460004
35,37,37,39ª1,39ª1áâà2,41,43,45
7700000000003570031
33ª1áâà1,33ª1áâà2,35,35áâà3
7700000000003780009
122,123,124,125,126,127,128,129,130
7700000000003830033
160áâà9,160áâà10,160áâà11,160áâà12
7700000000003830042
160áâà13,160áâà14,160ª1,160ª2,160ª3
7700000000003830043
160ª4,160ª5,160ª6,160ª6áâà1,160ª7
7700000000003830044
16áâà251,16ª1,16ª2,16ª3,16ª7,16ª8
7700000000003850029
16ª11,16ª12,16ª13,16ª14,16ª17,16ª21
7700000000003850030
16ª29,16ª31,16ª36,16ª37,16ª46,16ª53
7700000000003850031
16ª54,16ª59,16ª60,16ª61,16ª82,16ª85
7700000000003850032
16ª99,16ª104,16ª150,16ª167,16ª168
7700000000003850033
16ª169,16ª171,16ª172,16ª173,16ª174
7700000000003850034
23,24áâà4,24ª1,24ª2,24ª3,26áâà3
7700000000003850035
26áâà7,26áâà8,26ª1,28,28áâà2,28áâà3
7700000000003850036
31áâà4,31áâà5,33,35,37,37áâà1
7700000000003970008
7ª1áâà2,12áâà4,21,23
7700000000004030002
17,19,21,23,25,27,29,31
7700000000004040008
18áâà3,19ª1,19ª2,19
7700000000004050010
61,63,65,71,75,77,79,79
7700000000004150011
13ª3,13ª4
7700000000004170020
8áâà10,8áâà11,8áâà30,10,10áâà1,10ª4,12
7700000000004290006
9áâà23,9áâà24,9áâà26,9áâà28,9áâà29
7700000000004320044
9áâà30,9áâà31,9áâà33,9áâà37,9áâà42
7700000000004320045
26ª1,26ª1áâà2,26ª2,28,30,32
7700000000004490014
5ª61,5ª62,5áâà1,5áâà2,5áâà3,5áâà1
7700000000004640007
25ª3,25ª3áâà2,27ª1,27ª1áâà2,27ª1áâà3
7700000000004730014
7700000000004730015
2áâà69,2áâà70,2ª1,2ª1,6,6áâà2,6áâà3
7700000000004740018
7700000000004740019
6áâà10,6áâà11,6áâà19,6áâà20,6áâà21
7700000000004740020
6áâà22,6/10áâà18,6/10áâà23
7700000000004740021
4áâà4
7700000000004750002
248áâà10,248áâà11,248áâà12,250áâà1,262
7700000000004760255
58áâà1
7700000000004760256
44/45áâà2
7700000000004800021
24ª1,24ª2,24ª2áâà2
7700000000004970005
65ª1áâà2,67ª1,67ª1áâà2,67ª2,67ª3,69,71
7700000000005130039
7700000000005130040
7áâà4
7700000000005280003
22áâà5,22áâà8,22áâà9
7700000000005300011
71áâà2,73,75
7700000000005300020
7700000000005460001
27/3áâà2,27/3áâà3,27/3áâà5
7700000000005530007
63/43áâà2
7700000000005610018
20áâà2,20áâà3,20áâà4,20áâà5,20áâà5
7700000000005660002
1,3,5,5ª2,7áâà1,7áâà2,9,11,11áâà2,13áâà1
7700000000005900005
7700000000006140002
16_20
7700000000006220004
7700000000006510002
10áâà3
7700000000006720003
30áâà13,30áâà14,30áâà16,30áâà17
7700000000006740006
30áâà18,30áâà19,30áâà20,30áâà22,30áâà23
7700000000006740007
7700000000006850003
30áâà4,30áâà5,30áâà6
7700000000007080013
7áâà1,8ª2
7700000000007210004
106,108
7700000000007330099
91,91áâà2,91ª1,91
7700000000007330105
23áâà5,23áâà6,23áâà7,23áâà10
7700000000007380008
76ª2,76ª2áâà1,76ª3áâà1
7700000000007420038
37ª2áâà2,37ª3,37ª4,37ª5,51
7700000000007500047
22/30áâà2
7700000000007500048
7700000000007500049
38áâà17,38áâà18,40,40áâà2,40áâà3
7700000000008360016
40áâà4,40áâà5,40áâà6,40áâà7,40áâà17
7700000000008360017
40áâà18,40áâà19
7700000000008360018
13áâà5,13áâà6,13áâà7,13áâà8
7700000000008900026
7,7áâà2,7áâà3,7áâà4,9,10áâà1,10áâà2
7700000000008900027
10áâà3,10áâà4,10áâà5,10áâà7,10áâà8
7700000000008900041
13áâà3,13áâà5,15,17,19,19,19,21
7700000000008940026
21áâà1,21,21,23
7700000000008940027
6,8,24/15,24/15áâà6,28,30,46áâà1,46áâà2
7700000000009030008
2áâà2,2áâà3,5ª1,5ª1áâà1,5ª2,5ª3,6áâà1
7700000000009250007
11ª2,11ª6
7700000000009330006
76áâà5,76ª1,76
7700000000009530066
12,12áâà1
7700000000009530068
12áâà
7700000000009530071
1áâà4,1áâà5,1áâà7,1áâà10,6áâà3,8
7700000000009530072
10,10áâà1
7700000000009530073
27áâà22,27áâà23,27áâà24,31,31áâà1
7700000000009690012
7700000000009690013
7700000000009690014
31áâà23,31,31áâà1,31áâà2,33áâà1
7700000000009690015
35áâà1,35áâà2,35áâà3,35áâà4
7700000000009690016
11áâà2,11áâà3,11áâà4,11áâà5,14,16,16ª1
7700000000009870005
5áâà45,5áâà46,5áâà47,5ª1
7700000000009970012
13ª3áâà3
7700000000010590019
7700000000010750004
9áâà18,9áâà19,9áâà20,9áâà21,9áâà22,14,16
7700000000010750005
7700000000010870003
20áâà1,20áâà2,20áâà3,21,22,23,25
7700000000011020003
11áâà2,11áâà3,13,19,20
7700000000011180005
25áâà1,27_31,29,31,31áâà1,31áâà2
7700000000011480008
22áâà6,24_24áâà1,24_24áâà2
7700000000011620014
3ª19áâà9,3ª19áâà11,3ª19áâà13,3ª19áâà14
7700000000012280079
8ª1áâà5
7700000000012280082
20áâà2,21áâà1,21áâà2,22
7700000000012360005
79áâà34,79ª1,79ª2,79ª3,79ª5,79ª6,79ª7
7700000000012420094
9áâà1,11/7
7700000000013150007
11ª2áâà4,22,22áâà2
7700000000013170008
10áâà3,11
7700000000013330002
7700000000013790018
1áâà1,1,2
7700000000013790019
61,61ª1áâà1
7700000000013860014
14áâà1,16áâà1,16áâà2,16áâà3
7700000000013980021
16/5áâà1
7700000000014060003
7700000000014150002
24ª5áâà2,24ª6,26,26áâà1,26áâà2,28
7700000000014510015
9ª4áâà25,9ª4,9,10ª1,10ª1áâà2,10ª2
7700000000014680030
10,12,12áâà2,12ª2,12,14
7700000000014680034
12áâà3,14áâà1,14ª1,14ª2,16ª1,18ª1,18ª2
7700000000014830010
7700000000014850012
19áâà2,19,19,19,19áâà1,19áâà2,21
7700000000015320007
21,23,23,23,23áâà2,23
7700000000015320008
29,33áâà1,33áâà3,33áâà5,33ª1
7700000000015560005
24áâà2,24_28
7700000000015710007
38áâà7,38áâà8,38áâà9,38áâà10,38áâà11
7700000000015780040
22áâà6,22áâà7,24,26,26áâà2,26áâà3
7700000000015840006
7700000000015970004
7700000000016480002
12áâà6,12áâà7,12,14
7700000000016490004
1áâà3,1áâà5,1áâà5,1áâà6,1áâà7,1áâà8
7700000000016550002
1áâà13,1áâà17,1áâà20,1áâà22,1áâà22
7700000000016550003
1áâà26,1áâà40,1áâà46,1áâà72,1áâà73
7700000000016550004
1áâà76,1áâà78,1áâà95,1áâà101,1áâà105
7700000000016550005
1áâà111,1áâà130,1áâà137,1áâà140
7700000000016550006
1áâà141,1áâà143,1áâà145,1áâà145
7700000000016550007
1áâà158,1áâà159,1áâà183,1áâà190
7700000000016550008
1áâà301,1áâà303,1áâà322,1áâà331
7700000000016550009
1áâà333,1áâà388,2áâà1,2áâà2
7700000000016550010
17áâà5
7700000000016660004
338áâà1,340,342,344,346,348,350
7700000000016860180
352áâà1,352áâà2,354/1,356,358,360,362
7700000000016860181
362,366,368,370áâà1,370áâà2,372,374
7700000000016860182
119ª1áâà1,119ª2,121/1áâà1,121/1ª1
7700000000016890122
121/1ª1áâà1,121/1ª1áâà2,121/1ª2,121/1ª3
7700000000016890123
22áâà2
7700000000016960009
20,21
7700000000017020002
8áâà25,9ª1,9ª2
7700000000017190007
7700000000017250025
21áâà19,21áâà20,21áâà21,23áâà1
7700000000017250026
43áâà2,43ª1
7700000000017260016
7700000000017310039
21áâà11,21áâà16,21áâà25,23
7700000000017490006
48_50ª10
7700000000017550013
30áâà3,30áâà4
7700000000018070003
12áâà27,12áâà28,12áâà29,12áâà1
7700000000018090008
12áâà2,12,17,23áâà1,23/25
7700000000018090009
25,27,27áâà1,29,31
7700000000018230003
31áâà3,31áâà4
7700000000018340003
21ª1,21ª2,21ª3
7700000000018360018
7700000000018390007
6,6áâà2,6áâà3,6áâà4,10,10áâà1
7700000000018420014
6áâà4,6áâà5,6áâà6,6,6,6áâà1,6áâà2
7700000000018510013
1ª7,1ª8,1ª9
7700000000018540019
119áâà12,119áâà13,119áâà14,119áâà15
7700000000018560107
119áâà470,119áâà479,119áâà554,119áâà631
7700000000018560210
14áâà1,14áâà21
7700000000018640022
29_,31,31áâà1,31ª1,31ª2,31ª3,31ª4
7700000000018800023
31ª5,31ª6,33ª1,33ª2,35,35,37,37áâà1
7700000000018800024
18,20áâà1,20áâà3
7700000000019010004
15/17,19
7700000000019020002
12áâà3,12,14
7700000000019140007
51áâà1,53áâà1,53áâà8,55áâà1,55áâà2
7700000000019160010
7700000000019240005
16áâà55,16áâà58,16áâà59,16áâà60
7700000000019260017
16áâà61,16áâà65,16áâà66
7700000000019260018
70/4áâà2
7700000000019300011
19ª1áâà1,19ª1áâà2,19ª2,19ª3,19ª3áâà1
7700000000019400005
21,23,25/1,25/1áâà1,25/1áâà2
7700000000019400006
7700000000019420001
7700000000019550004
17ª1áâà14,17ª1áâà15,17,17áâà3
7700000000019580007
7700000000019580008
16/25
7700000000019850014
34,36,38áâà1,38áâà2
7700000000020330005
7700000000020390003
6,6áâà4
7700000000020510003
18áâà1,19,19áâà1,20,20áâà3,22,22áâà2
7700000000020560004
5ª1áâà1,5ª2,7áâà1,7áâà2,7áâà3,7áâà4
7700000000020730033
7áâà5,7áâà6,11,13ª1,13ª1áâà1,13ª2,13
7700000000020730034
15ª2,17/50
7700000000020730035
26/10áâà3,26/10áâà18
7700000000020750003
36/9ª2
7700000000020850011
3áâà1,3áâà1
7700000000021130025
10áâà4,10áâà5
7700000000021130035
54ª2,54,55,55áâà1,59,59áâà1,61
7700000000022160013
24,26,26áâà1,26ª1,26ª1áâà1,28,30,30ª1
7700000000022470011
30ª2,32,34,34ª1,34ª1áâà1,34ª1áâà2,36
7700000000022470012
21áâà11,21áâà19,24áâà1,24áâà2,26,33
7700000000023580009
28áâà1,28áâà2,30,30áâà2,30áâà3,36
7700000000023680028
36áâà2,36áâà3,38áâà1,38áâà4,38áâà5,40,42
7700000000023680029
100,102,102áâà1,102/47
7700000000023920127
115ª2áâà2,117,119ª1,119ª2
7700000000023920128
29,31,31áâà
7700000000024480010
9áâà5,9áâà1,9áâà2
7700000000024720007
8ª5áâà3,10ª2
7700000000024880005
12,12áâà2,14
7700000000025010007
26/28áâà4,30
7700000000025020013
7700000000026010070
50/2áâà1
7700000000026250020
20ª2,20ª3
7700000000028420005
105áâà3,105áâà4,105áâà5,105áâà6
7700000000028650047
105áâà7,105áâà8,105áâà9,105áâà10
7700000000028650048
105áâà11,105ª7áâà1,106ª2,107,107
7700000000028650049
27/12ª4
7700000000029640021
14ª2,14,16/2
7700000000030880043
10ª1,10ª2,12
7700000000030960007
93áâà1
7700000000031700057
60áâà4
7700000000031870030
9áâà13,9áâà14,9áâà15
7700000000036160003
13áâà8
7700000000036710025
7700000000036990005
32áâà17,32áâà18,32áâà19
7700000000039820007
66ª1,66ª2,66ª3,66ª4,66ª5,66ª6,66ª7
7700000000050080024
66ª8,66ª9,66ª10,66ª11,66ª12,66ª13
7700000000050080025
66ª14,66ª15,66ª16,66ª17,66ª19,66ª20
7700000000050080026
43ª3áâà1,43ª4
7700000000070550033
7áâà3,7áâà4,7áâà5,7áâà6,7áâà7,9áâà1
7700000000071130004
29áâà2,35
7700000000071720005
7700000000071760063
82áâà11,82áâà12,84áâà3,84áâà5,84áâà7
7700000000071910036
15áâà13,17,19áâà1,21,21áâà1,25
7700000000072160004
7700000000072520001
35áâà1,41áâà1
7700000000073150010
3,8
7700000000073390001
6,6áâà1
7700000000073390002
30áâà1,31,33ª1,35ª1,37ª1,39ª1
7700000000073910006
7700000000074020001
7700000000074030001
2áâà1,6
7700000000074040001
7700000000074040002
49áâà14,49áâà15,49áâà16,49áâà17
7700000200017820005
49áâà18,49áâà19,49áâà20,49áâà21
7700000200017820006
49áâà22,49áâà23,49áâà24,50,51,52,53
7700000200017820007
53áâà1,55,56áâà1,57,58,59,60,61,62,63
7700000200017820008
64,65,66,68,68,69,70,71,75,78,80,80
7700000200017820009
82,96,96áâà1,110
7700000200017820010
7700000200516980015
3301500000600330001
601370
3337
3324
17252000003
3301500000600330002
3301500000600330003
áâà4
3301500000600330004
2500000100006680001
2500000100006680002
5002200021100000001
143084
46241804005
5002200022400000001
143060
46241864009
5002200018200000001
143041
46241858005
79,90,92,92 ,96,100,102
3401100100002200001
3401100100001450001
3401100100000660001
(2-20),(1-17),63
3401100100002510001
3401100100001990001
3401100100000500001
(2-26),(1-47)
3401100100001130001
3401100100000020001
3401100100000950001
3401100100002880001
6-26
3401100100002590001
1,2,3,5
3401100100002800001
(2-8),(5-15)
3401100100001090001
(4-24),(1-57)
3401100100000210001
4-20
3401100100001660001
3401100100001880001
3401100100000640001
(6-30),(3-33)
3401100100001390001
(2-66),(1-41)
3401100100004640001
(4-10),(1-13)
3401100100002370001
(2-14),7
3401100100001190001
3401100100000740001
2,3,7,11
3401100100005070001
3401100100000790001
3401100100000800001
3401100100000910001
3401100100000230001
(4-104),(1-109)
3401100100001810001
105-109
3401100100000050006
(2-32),(1-33)
3401100100000280001
3401100100000510001
(4-22),(1-23)
3401100100000560001
(2-12),(3-15)
3401100100001650001
3401100100000650001
(4-26),11,13
3401100100001160001
1,2-32
3401100100000420001
3401100100001070001
3401100100001320001
(3-43),(2-42)
3401100100001590001
(2-28),(5-29)
3401100100001080001
3401100100002530001
(2-70),(1-85)
3401100100000600001
(10-54),(13-85)
3401100100001100001
(2-30),(1-53)
3401100100002230001
(4-36),(1-37)
3401100100001520001
3401100100001140001
3401100100001340001
(2-14),(5-15)
3401100100000930001
3401100100000260001
3401100100002300001
3401100100002560001
3401100100002460001
3401100100004540001
(2-36),(1-21)
3401100100002440001
3401100100002450001
(2-16),31
3401100100002480001
(2-10),(5-11)
3401100100002500001
(2-22),21
3401100100002580001
(4-34),(1-37)
3401100100002080001
(2-12),(3-23)
3401100100004880001
(16-40),(31-65)
3401100100001120001
(4-68),(1-73)
3401100100001330001
(2-12),(5-23)
3401100100001380001
(6-26),(5-43)
3401100100001700001
(2-74),(3-81)
3401100100001170001
(18-38),(5-19)
3401100100001710001
(2-82),(3-69)
3401100100000100001
3401100100001750001
3401100100000360001
3401100100000900001
3401100100002020001
3401100100000220001
(14-108),(19-63)
3401100100001900001
(38-46),5,43
3401100100001960001
3401100100001310001
3401100100000330001
(25-33),4
3401100100001600001
3401100100002180001
4,4 ,4¡,5
3401100100001630001
(10-16),(3-47)
3401100100001420001
(12-86),(1-39)
3401100100000780001
3401100100001440001
(30-32),(23-33)
3401100100000160001
3401100100001560001
3401100100000390001
(2-58),(3-69)
3401100100001040001
3401100100000410001
(6-26),(1-29)
3401100100000430001
3401100100000450001
(2-54),(3-77)
3401100100001050001
(1-41),(2-20)
3401100100000490001
(2-80),(5-85)
3401100100001680001
3401100100000580001
3401100100000590001
(4-68),(1-39)
3401100100000610001
(2-24),(5-25)
3401100100001110001
(1-25),(6-54)
3401100100000680001
(1-75),(4-46)
3401100100002240001
3401100100000370001
(2-34),(5-21)
3401100100002540001
3401100100002550001
3401100100000710001
(2-32),(3-7)
3401100100001210001
(1-31),(6-22)
3401100100000750001
(2-46),(3-33)
3401100100002250001
(4-26),(3-11)
3401100100002260001
(1-25),(4-26)
3401100100000140001
(3-73),(4-46)
3401100100002270001
(2-70),(1-47)
3401100100000820001
3401100100000840001
3401100100000200001
(3-29),(4-30)
3401100100001500001
3401100100000940001
3401100100002310001
3401100100000630001
(3-197),(4-126)
3401100100001360001
3401100100000690001
(3-29),(4-98)
3401100100002840001
(3-113),(4-148)
3401100100000120001
(9-15),(10-16)
3401100100001460001
(9-15),(14-20)
3401100100001230001
3401100100000880001
(3-151),(2-182)
3401100100001490001
(4-14),(3-13)
3401100100001300001
3401100100001260001
3401100100000520001
8-36
3401100100001910001
3401100100000090001
3401100100001850001
(11-23),6
3401100100002470001
(2-24),(3-13)
3401100100000700001
3401100100001760001
3401100100000730001
3401100100001620001
(2-40),(3-39)
3401100100001220001
(3-27),(16-26)
3401100100000030001
4,7,8,9,10
3401100100001640001
18,25,27
3401100100002070001
(13-27),(52-74)
3401100100001690001
(34-48),(47-59)
3401100100002150001
(70-74),58,38,(23-25),39,43,47
3401100100002190001
(15-19),(16-44)
3401100100002060001
3401100100000380001
3401100100000400001
3401100100000440001
3401100100000470001
(6-66),(5-67)
3401100100001670001
40,40 ,40¡
3401100100002320001
(2-54),(5-57)
3401100100001580001
137-157
3401100100001830001
3401100100002210001
3401100100000570001
(6-76),(9-79)
3401100100001770001
3401100100000620001
15-25
3401100100002030001
(1-9),2 ,2¡
3401100100000340001
(2-16),(3-11)
3401100100001610001
3401100100001200001
6,7,8,10
3401100100001780001
(2-34),(19-31),(3-7)
3401100100000110001
(26-98),(25-95)
3401100100002110001
3401100100000760001
(25-95),(26-98)
3401100100002120001
3401100100000810001
3401100100000850001
3401100100001030001
3400000200000370011
404112
5,7 ,9,11
5200000100005080002
6900100004600000001
170545
28220876028
6900100009900000001
170542
28220876006
6900100013500000001
28220878007
6900100015900000001
28220876007
6900100025300000001
28220876012
6900100033300000001
28220876017
6900100042600000001
28220876021
6900100043400000001
28220876025
6900100048500000001
170541
28220876024
6900100054100000001
28220880011
6900100000300000001
28220814001
6900100000600000001
28220840002
1-510
6900100023900000001
28220880014
6900100026400000001
28220814008
6900100028200000001
28220880005
6900100047900000001
28220880008
6900100052200000001
28220880010
6900100013100000001
28220824040
6900100021000000001
28220838012
6900100024800000001
28220838015
6900100024900000001
28220848011
1-150
6900100032700000001
28220824031
6900100035800000001
28220878010
6900100038200000001
28220824042
6900100002800000001
28220840003
6900100024500000001
28220824006
6900100039200000001
28220868032
6900100000700000001
28220808007
6900100000800000001
170547
28220808042
6900100001500000001
28220808020
6900100001300000001
28220878002
6900100018200000001
28220824041
6900100018400000001
28220840012
6900100021700000001
28220808030
6900100023100000001
28220848009
6900100023200000001
28220830011
6900100024200000001
28220000000
6900100025500000001
28220848013
6900100026100000001
28220824008
6900100027000000001
28220830034
6900100029600000001
28220840014
6900100030200000001
28220824010
6900100031100000001
28220848016
6900100031300000001
28220808034
6900100032500000001
28220848017
6900100033600000001
28220882012
6900100040100000001
28220830020
6900100042100000001
28220840019
6900100043300000001
170526
28220868016
6900100043700000001
28220838027
6900100045000000001
28220838028
6900100045800000001
28220808040
6900100046800000001
28220840020
6900100049900000001
170544
28220810070
6900100030000000001
28220840001
6900100054300000001
170551
28220826026
6900100020800000001
28220838045
6900100049200000001
6900100048600000001
170553
28220563000
6900100012500000001
28220818005
6900100032300000001
28220818011
2300000100004980003
350080
2300000103101070001
350911
(1-153)
2300000103101070002
(124-238)
2300000103101070003
350910
(155-311)
2300000103101070004
(240-998)
2300000103101070005
350912
(313-999)
2300000103101070006
2300000103100020001
2300000103100020002
(172-300)
2300000103100020003
(71-233)
2300000103100020004
(302-998)
2300000103100020005
(235-999)
2300000103100020006
2300000103100280001
2300000103100280002
(84-220)
2300000103100280003
(155-291)
2300000103100280004
(222-308)
2300000103100280005
(293-449)
2300000103100280006
2300000103100320001
(1-151)
2300000103100320002
(158-286)
2300000103100320003
(153-267)
2300000103100320004
(288-998)
2300000103100320005
(269-999)
2300000103100320006
2300000103100440001
2300000103100440002
(64-178)
2300000103100440003
(55-151)
2300000103100440004
2300000103100590001
2300000103100590002
2300000103100590003
2300000103100590004
(2-182)
2300000103100800001
(1-173)
2300000103100800002
(184-260)
2300000103100800003
(175-275)
2300000103100800004
(262-998)
2300000103100800005
(277-999)
2300000103100800006
2300000103100960001
2300000103100960002
2300000103100960003
2300000103100960004
2300000103101000001
2300000103101000002
2300000103101000003
(69-999)
2300000103101000004
(34-100)
2300000100006960001
350066
(37-161)
2300000100006960002
2300000100006960003
2300000100006960004
2300000100006960005
2300000100006960006
(163-183)
2300000100006960007
(185-999)
2300000100006960008
350088
6900600018500000001
28210804038
6900600008900010001
28210810035
6900300011600000001
171976
28204802030
6900300018800000001
171957
28204856012
(40-56),67,71,85,100,106,110
2400001200001500001
2400000100005470001
2400000100005040001
2400000100000350001
2400000100000840001
140¤,142£
2400000100000960005
2400000100009490001
2,34
2400000100001750001
72/1,72/2,72/3,72/4,72/5,72/6,72/7,72/8
2400000100002460004
2400000100002500001
2400000100004310004
2400000100004700001
2400000100005780001
2,3,5 
2400000100003840001
2400000100008280001
21 ,23 /1,23 /2,(27-55)
2400000100010320002
47 ,49 ,51
2400000100002460005
2400000100001960001
04401137700
2400000100011380001
1700000100000150001
667003
1719
1701
93401000000
(182-240)
1700000100001160001
667000
(168-178),(242-332)
1700000100001160002
(155-163),(169-331)
1700000100001160003
(8-166),(5-15)
1700000100001160004
667007
(60-250),(89-279)
1700000100001570001
(2-58),(1-85)
1700000100001570002
667001
(280-344),(348-350)
1700000100001570003
667005
37ª3,37ª2,27ª1,27ª2,35ª1,25ª1,44ª1,1ª
1700000100000870001
667011
40,42,44,41,43,27,29,25
1700000100000870003
1711
1700000100000870002
(281-391)
1700000100001570004
3700300100000380001
3700300100000380002
3700300100001540001
35-99
3700300100001540002
3500100036500020001
5600600100000190001
461904
(22-42),(15-21)
5600600100000190002
461906
(13-15),(19-23)
5600600100000020001
1,5,8,9,11,18,24,30,40,(48-52)
5600600100000020002
1,2,4,10,(3-23)
5600600100000820001
(4-38),41
5600600100000820002
(12-58),(15-73)
5600600100000490001
5600600100000370001
80,82
5900000100007830001
614013
23,63
7800000000004190001
11,67,(25-61),(2-64)
7800000000004190002
195043
7800000000007840010
7800000000007840011
(2-22),(3-49)
2200000100001220003
4001200014500050001
249730
4001
29216804001
4001200014500050002
6-11
4001200014500050003
4001200014500050004
13 
4001200014500050005
4001200014500050006
4001200014500050007
4001200014500050008
16 
4001200014500050009
4001200014500050010
17 
4001200014500050011
18-20
4001200014500050012
4001200014500050013
21 
4001200014500050014
21¡
4001200014500050015
4001200014500050016
3602100100000780001
396422
20233501000
3602100100000430001
3602100100000920001
3602100100000770001
3602100100000580001
(41-87),(54-104)
3602100100000780002
396421
(41-139),(36-90)
3602100100000430002
18-22
3602100100000920002
3602100100000770002
33-61
3602100100000580002
141-155
3602100100000430003
396420
(111-127)
7400000900001850013
7400000900001850014
(210-224)
7400000900001370016
(211-225)
7400000900001370017
156,158
7400000900003170013
(186-220)
7400000900003170014
(227-231)
7400000900003170015
52 ,52,53-66,67 ,67,68,69,70 ,70
7601000025900000003
7601000033700000001
78226825003
7601000001300000001
78226820002
7601000036500010001
78226820014
1,2,4,4 ,5,6
7601000002900530001
7601000002900190004
42 ,42,43-74
7601000018600000002
36 ,36,37 ,37,38-51,52 ,52¡,52,53,54 
7601000017800040002
54¡,54,55,56 ,56¡,56,57 ,57,58 ,58,59,60
7601000017800040003
61 ,61,62,63,64 ,64,65,66,67 ,67,68-75
7601000017800040004
1 ,1,2-5,7,9,11
7601000026200000001
78226895013
7601000036600000001
78226895015
56 ,56,57-59,60,62,63
7601000012000000002
16¡,16,17,25,26-45
7601000018100000002
7601000000100170001
133 ,133,134-138,139£,139¤,139,140-185
7601000000100410003
7601000036700000001
78226840028
7600100025400070001
7600100025400080001
1-8,10,12,14-20,23,24
7601000002900540001
7601000002900550001
7601000002900560001
7601000002900570001
7601000002900580001
1,2,4,5,6
7601000002900590001
2,3,4,5,6,7,8,9,10,11,12,14,15,16,17
7600100071700000001
150502
5000000700000140006
(205-500),(188-500)
3800000900000540001
665002
(1-201),(2-186)
3800000900000540002
665006
165-500
3800000900000420001
1-164
3800000900000420002
3800000900000020001
665010
(51-63),(44-50)
3800000900000020002
3800000900000210001
665004
(29-77),(16-56)
3800000900000210002
665001
(79-113),(58-90)
3800000900000210003
665009
(115-131),(92-106)
3800000900000210004
665008
(110-116)
3800000900000210005
665003
(71-601),(76-600)
3800000900000070001
(3-69),(2-74)
3800000900000070002
(209-601),(222-600)
3800000900000100001
(1-207),(2-220)
3800000900000100002
3800000900000110001
3800000900000110002
(155-601),153,(156-600)
3800000900000190001
(1-153),(2-154)
3800000900000190002
(209-601),(174-600)
3800000900000220001
(1-195),(14-172)
3800000900000220002
(101-601),(140-600)
3800000900000230001
(1-99),(2-138)
3800000900000230002
3800000900000240001
3800000900000240002
(73-601),(60-600)
3800000900000270001
3800000900000270002
3800000900000300001
1,2,4,11
3800000900000300002
(75-119),(72-114)
3800000900000160001
3800000900000160002
(123-601),(116-600)
3800000900000160003
3800000900000360001
3800000900000360002
(117-601),(206-600)
3800000900000410001
(3-115),(2-204)
3800000900000410002
(215-601),(242-600)
3800000900000430001
(1-213),(8-240)
3800000900000430002
(177-601),(194-600)
3800000900000450001
(1-175),(2-192)
3800000900000450002
(17-57),(14-62)
3800000900000460001
3800000900000460002
3800000900000460003
(59-93),(64-94),57
3800000900000460004
(215-267),(232-278)
3800000900000510001
(2-213),(2-230)
3800000900000510002
(88-102)
3800000900000550001
(5-29),(4-84)
3800000900000550002
(87-129),(72-104)
3800000900000560001
131,133
3800000900000560002
(1-85),(2-70)
3800000900000560003
(165-183),(168-206)
3800000900000620001
(123-163),(126-164)
3800000900000620002
3800000900000630001
3800000900000630002
(71-103),(76-92)
3800000900000670001
3800000900000670002
(39-69),(42-72)
3800000900000680001
3800000900000680002
(73-95),(74-92)
3800000900000680003
(59-105),(44-88)
3800000900000720001
3800000900000720002
3800000900000720003
(107-147),(90-110),128
3800000900000720004
(55-59),(44-48)
3800000900000740001
3800000900000740002
3800000900000750001
3800000900000750002
3800000900000750003
(201-601),(230-600)
3800000900000760001
(5-199),(12-228)
3800000900000760002
3800000900000790001
1,2,2,3-600
3800000900000790002
(75-119),(60-108)
3800000900000800001
3800000900000800002
(123-601),(110-600)
3800000900000800003
(2-600)
3800000900000850001
(1-601)
3800000900000850002
3800000900001240001
(7-55),(36-56)
3800000900001240002
(63-601),(74-600)
3800000900000880001
3800000900000880002
3800000900000910001
(31-100),(28-100)
3800000900000910002
(51-61),(28-40)
3800000900000980001
(11-49),(2-26)
3800000900000980002
17,26,28
3800000900001000001
3800000900001000002
(25-73),(76-108)
3800000900001210001
(1-23),(2-74)
3800000900001210002
3800000900001040001
8-15
3800000900001040002
(183-300),(116-300)
3800000900001060001
(51-181),(28-114)
3800000900001060002
(5-19),(22-38)
3800000900001070001
3800000900001070002
(11-31),(8-22)
3800000900001080001
(87-115),(44-78)
3800000900001080002
(33-43),48,50
3800000900001080003
(17-27),(52-70)
3800000900001120001
(5-15),(4-50)
3800000900001120002
(117-124),(100-136)
3800000900001150001
(1-115),(2-98)
3800000900001150002
3800000900001190001
3800000900001190002
3801900300000060001
665075
25428555000
3801900300000060002
665076
(1-59),(2-18)
3801900300000170001
(61-300),59,(20-100)
3801900300000170002
3801900300000200001
(43-201),(62-201)
3801900300000200002
3801900300000350001
3801900300000350002
3801900200000840001
665053
25428505000
3801900200000840002
665050
55-95
3801900200000540001
50-100
3801900200000490001
20-58
3801900200000300001
3801900200000090001
665051
(29-201),(34-200)
3801900200000090002
665052
3801900200000190001
(33-201),(32-200)
3801900200000190002
(1-47),(4-30)
3801900200000260001
(49-200),(32-200)
3801900200000260002
3801900200000110001
(1-200)
3801900200000110002
3801900200000270001
(59-200),(66-200)
3801900200000270002
3801900200000300002
3801900200000390001
(1-50),(23-100)
3801900200000390002
3801900200000440001
8-100,2
3801900200000440002
(7-35),(2-28)
3801900200000460001
(37-100),(30-100)
3801900200000460002
(1-59),(6-26)
3801900200000500001
(61-100),(28-100)
3801900200000500002
3801900200000530001
25-100
3801900200000530002
3801900200000540002
3801900200000490002
3801900200000650001
(21-100),(24-100)
3801900200000650002
7000000104300000001
634506
69401370001
6400000700000810001
(67-73),(58-64)
6400000700000810002
6400001300004180001
413111
6449
63450000000
(8-16),23,25,27,28
6400001300004180002
413121
6400001300004180003
413113
(2-58),(1-69)
6400001300000040001
413100
60,62,66
6400001300000040002
(2-50),(1-117)
6400001300000210001
(119-127)
6400001300000210002
413118
6400001300000290001
413117
(20-30),(3-9)
6400001300000290002
(32-54),(11-21)
6400001300000290003
413105
(2-70),(1-77)
6400001300000390001
413106
(72-156),(79-169)
6400001300000390002
413124
6400001300000440001
6400001300000440002
(2-18),(1-11),43-55
6400001300000500001
(74-134),22,(57-115)
6400001300000500002
6400001300000560001
16,18,(1-19),25-47
6400001300000560002
413115
6400001300000750001
8,(9-19)
6400001300000750002
6400001300000750003
(2-92),(1-95)
6400001300000870001
(94-136),(97-147)
6400001300000870002
6400001300000990001
413114
(2-18),(5-19)
6400001300000990002
(2-48),(25-53)
6400001300001010001
(50-100),(55-107)
6400001300001010002
(2-6),(3-7)
6400001300001160001
(8-12),9
6400001300001160002
6400001300001310001
(34-56),(73-81)
6400001300001310002
(2-24),(1-77)
6400001300001340001
(26-80)
6400001300001340002
413125
(79-143),157,169
6400001300001340003
6400001300001440001
(164-188)
6400001300001440002
6400001300007000001
(84-134),(85-131),145-151
6400001300007000002
6400001300001460001
(38-80),(45-69)
6400001300001460002
6400001300001530001
413116
6400001300001530002
(2-14),(24-112),(3-21),(31-129)
6400001300001570001
(116-138),171
6400001300001570002
6400001300001600001
2,4,12,14,16,(5-13)
6400001300001600002
(24-72),(21-51)
6400001300001700001
(82-130),(53-93)
6400001300001700002
(180-210),(149-177)
6400001300001880001
(4-38),(50-64),(1-49)
6400001300001910001
6400001300001910002
(2-32),(21-43)
6400001300002030001
6400001300002030002
(12-20),8
6400001300002340001
(3-7),(13-17),(21-35)
6400001300002340002
6400001300002340003
6400001300002350001
(30-50),(1-19),(33-41),(49-65)
6400001300002350002
(4-76),(1-73)
6400001300002110001
(78-290),(75-301)
6400001300002110002
(14-16),284,292,(13-21)
6400001300002120001
6400001300002120002
(2-98),(35-87)
6400001300002140001
(100-114),(89-115)
6400001300002140002
413112
(50-54),30,32,34,(21-27)
6400001300002180001
6400001300002180002
6400001300002390001
6400001300002390002
(102-158),(91-119),(137-165)
6400001300002400001
(2-100),(1-89)
6400001300002400002
6400001300002400003
(2-50),(3-51)
6400001300002490001
(52-104),(53-103)
6400001300002490002
58,66,68,17,21,71,73,83
6400001300002530001
2,6,(10-40),(1-43)
6400001300002530002
(2-110),(11-111),1
6400001300002620001
(115-123)
6400001300002620002
(36-102),(11-83)
6400001300002670001
(132-154),(103-119)
6400001300002670002
(110-130),(91-101)
6400001300002670003
106,108,(85-89)
6400001300002670004
(96-156),(95-117)
6400001300002740001
6400001300002740002
(82-94),(85-93)
6400001300002740003
(36-134),(3-47)
6400001300002790001
6400001300002790002
(136-188),(49-81)
6400001300002790003
6400001300002790004
6400001300002800001
(28-62),(1-11)
6400001300002800002
6400001300002800003
(10-16),26
6400001300002800004
(148-222),87
6400001300002860001
6400001300002860002
(24-144),(3-85)
6400001300002860003
6400001300002920001
6400001300002920002
15,19,21
6400001300002960001
6400001300002960002
6400001300002960003
(8-26),(9-19)
6400001300002980001
6400001300002980002
(54-132),(133-191)
6400001300003000001
(2-32),(1-9),(15-131)
6400001300003000002
(68-122),(71-115)
6400001300003030001
(4-64),(35-69)
6400001300003030002
2,(1-33)
6400001300003030003
6400001300003070001
(36-72),(33-67)
6400001300003070002
(6-50),(1-63)
6400001300003080001
(52-74),(65-91),(95-103)
6400001300003080002
(10-142),(15-115)
6400001300003120001
(144-168),(117-137)
6400001300003120002
(2-60),(15-51)
6400001300003250001
6400001300003250002
(8-94),(1-93)
6400001300003280001
(96-130),(95-121)
6400001300003280002
(18-36),3
6400001300003290001
6400001300003290002
(4-14),(38-42),(5-15)
6400001300003290003
(10-84),(90-150),(15-157),11
6400001300003320001
(152-172),(159-181)
6400001300003320002
(78-170),(57-191)
6400001300003370001
(2-76),(1-55)
6400001300003370002
6400001300003430001
6400001300003430002
(90-136),(71-115)
6400001300003450001
(56-88),(1-35),(43-47)
6400001300003450002
6400001300003450003
(6-40),2,(1-11)
6400001300003530001
6400001300003530002
(20-44),(1-41)
6400001300003570001
(124-128),175,177
6400001300003570002
(48-120),(67-171)
6400001300003570003
6400001300003580001
26,28,(31-39)
6400001300003580002
(2-24),(1-7),41,43,45
6400001300003580003
(2-92),(1-97)
6400001300003740001
(96-106),(99-105)
6400001300003740002
(132-136),125,137,139
6400001300003770001
(138-148),29,31,145
6400001300003770002
(152-168),(33-43),147,151
6400001300003770003
6,12,14,(1-23),(113-123)
6400001300003770004
(2-66),(1-13),25
6400001300003860001
86,(19-23)
6400001300003860002
(2-8),(1-15)
6400001300004050001
6400001300004050002
6400001300004160001
(72-110),(87-137)
6400001300004160002
(30-56),(17-49)
6400001300004170001
6400001300004170002
11,(31-85)
6400001300004270001
(90-106),(87-117),125,(129-139)
6400001300004270002
(2-12),16,20,24,(76-88),(1-9)
6400001300004270003
(52-88),(27-77)
6400001300004300001
(2-50),(1-25)
6400001300004300002
(121-133)
6300000100007100003
(74-100),(73-141)
6300000100007080006
6302800002700000001
443535
6367
36214821003
,,1,
6302800000500000001
443532
36214803001
,
6302800003600000001
443533
36214821004
1,3,5,10,27,,
6302800004800000001
443528
36214558000
,1,2,,,
6302800000700000001
443531
36214804001
1,5,6,17
6300000100002590001
2,10-15
6300000100002590002
68/13
6300000800008150001
6300000100001530010
7800000000010030005
5002200014000000001
46241562000
5200300000900000001
607264
5202
22203856001
5200300010900000001
607243
22203880001
5200300000400000001
607216
22203808002
5200300000800000001
607266
22203844002
5200300002500000001
607249
22203810002
5200300002700000001
607240
22203852002
5200300002800000001
607255
22203804004
5200300003000000001
22203810003
5200300003100000001
22203810004
5200300003500000001
607218
22203828003
5200300003400000001
607212
22203828002
5200300004600000001
607201
22203840001
5200300004800000001
22203804005
5200300005400000001
607214
22203860002
5200300005700000001
22203844004
5200300006300000001
607242
22203555002
5200300007200000001
22203856003
5200300007300000001
22203856004
5200300007000000001
22203844005
5200300007500000001
607213
22203876003
5200300010100000001
22203880004
5200300008400000001
22203844007
5200300007900000001
22203808006
5200300007800000001
22203804008
5200300010600000001
607210
22203876006
5600000200000440001
462275
5600000200000440002
462278
3501300000100000001
161400
19230808001
6700400002100010001
215051
6723
66208808001
6700400002100020001
6700400002100030001
1-44,47
6702500100000190001
215800
6727
66258501000
53-56,58,59,61,63
6702500100000190002
215806
10,14,16
6702500100000220001
1-4,6-8,11,13,15,19,21,23,25,29,31,34
6702500100000220002
37,39,40,50,52,54-56
6702500100000220003
6702500100000220004
6702500100000540001
1,185
6702500100000540002
6702500100001000001
11 ,13,15
6702500100001000002
26,28,30,32-35,37,39
6702500100000740001
3,5,7-13,15,17,19,21,23-25,27,29,29 
6702500100000740002
31,33 
6702500100000740003
4,4 ,6,9/16,10/14,11/1,12,12 ,13-18
6702500100000270001
21-25,26,26 ,27,28/1,28/2,28/3,28/4,30
6702500100000270002
33-93
6702500100000270003
13-16,18
6702500100001350001
22-28
6702500100001350002
29,31,55,57
6702500100002030001
5,7,15,21,25
6702500100002030002
2,6,8,(1-13)
2402800004000010001
662222
04237819001
(2-96),(1-43),(47-99)
2402800004000090001
2402800004000100001
2,4,(1-21)
2402800004000060001
2402800004000070001
2402800004000020001
2402800004000050001
2402800004000030001
2402800004000040001
2402800004000110001
2402800004000080001
2402800001800010001
04237819002
(2-26),(1-9)
2402800001800020001
2402800001800030001
2402800003900010001
04237819004
2402800003900020001
(2-36),(11-29)
2402800003900030001
(2-18),(22-34),(3-31)
2402800003000010001
04237819003
2402800003000020001
(2-18),(1-9),13,15
2402800003000030001
2402800003000050001
2402800003000040001
2402800005500010001
04237819005
(20-30),(13-27)
2402800005500010002
(2-20),(26-34),44,(1-45)
2402800005500020001
7001700016500000001
634011
69254000000
5300400001100000001
175419
49208501002
2400000100001960002
(92-174),(77-183)
2204800000100310002
658030
(2-38),(1-45)
2204800000100810002
1800000100002390004
6600000100012490003
7700000000000020072
15áâà3,15áâà6
7700000000000250005
7700000000000410017
106
7700000000000710049
20,20,21,22,22ª1,30,33áâà1,33áâà2
7700000000001720024
7700000000001720025
15áâà213,15áâà214,16,17áâà1
7700000000001900056
2áâà7,2áâà8,2áâà9,2ª10,2áâà1,2
7700000000002500002
2áâà1,3,3áâà2,5,12,12áâà1,12,12áâà1
7700000000002500003
12áâà2
7700000000002500004
108áâà26,108áâà27,108áâà28,108áâà29
7700000000003350213
162,162,162áâà2,169ª
7700000000003830045
28ª1,28ª2,30
7700000000003850037
87ª2
7700000000003950036
7,9
7700000000004500007
10áâà8,10áâà13
7700000000004560012
7700000000004740022
262áâà1,266áâà1,266áâà2,266áâà3
7700000000004760259
7700000000004880006
16áâà241,16áâà242,16áâà243,16
7700000000005100067
13áâà17,15,19
7700000000007110015
38ª3áâà2,38ª4,40ª1,40ª2,42ª1,42ª1áâà1
7700000000007540022
7áâà19,7áâà20,7áâà21,7áâà22,9áâà1
7700000000007920028
44ª2,44ª2áâà1,44ª3,44ª4,46ª1,46,48
7700000000007920029
48ª1,48ª2,48ª2áâà1,48ª2áâà2
7700000000007920030
31áâà5,33,35,35áâà1,35áâà2,37
7700000000008860006
51áâà3,52,54,56,58,58áâà1,58ª1
7700000000008900044
58ª1áâà1,58ª1áâà2
7700000000008900045
33ª7áâà3,33ª8,33ª8áâà1,33ª8áâà2,35áâà1
7700000000008940028
35áâà2,35áâà3,35áâà5,35áâà6
7700000000008940029
8ª1áâà3,8ª1áâà4,8ª1áâà5
7700000000009530074
12ª1áâà1
7700000000010120005
21áâà5,21áâà6,21áâà7,21áâà9,21áâà10
7700000000010490018
64áâà1,70,74áâà1,78,78áâà1
7700000000010530021
20áâà2,20áâà3,24
7700000000011400019
27áâà3,28,28áâà1,29,40,40áâà2
7700000000013840024
54ª2,54ª2áâà1,56,56áâà1,56áâà2,56ª1
7700000000014350013
44áâà2,44ª1,44ª2,44ª2áâà2,44ª3
7700000000014680035
44,44áâà2
7700000000014680036
17áâà16,17áâà17,17áâà18,17áâà19,19
7700000000014720008
28ª4áâà1,28ª4áâà2,28ª4áâà3,30,30
7700000000014860004
9áâà1,10,12
7700000000016510005
132,132áâà1,134,136,138,140áâà1,140áâà2
7700000000016890124
2ª1,2ª1áâà1,2ª1áâà5
7700000000017520025
124ª17,124ª18,124ª19,124ª20,124,124
7700000000018560240
7700000000018560241
80áâà4,80
7700000000019090038
22,22ª2,24,26,28,28áâà2,28áâà3,28ª2,28
7700000000019430021
18ª1
7700000000019430022
7700000000019950001
7700000000019950002
13áâà3,13áâà4
7700000000020870003
19áâà2,20,23
7700000000021120003
6áâà13,6áâà14,6,6áâà2,6áâà3,6áâà1
7700000000021130036
4,5áâà1,6,6áâà1,6,8,10,10,12,12áâà2
7700000000021200005
24ª3áâà2,24
7700000000021220008
15áâà37,15áâà38,15áâà39,15áâà40
7700000000021230008
15áâà41,15áâà42,15áâà43,15áâà44
7700000000021230009
15áâà45,15áâà46,15áâà47,15áâà48
7700000000021230010
15áâà49,15áâà50,15áâà54,15áâà57
7700000000021230011
15áâà58,15áâà1,15áâà2,15áâà3
7700000000021230012
15áâà4,15áâà5,17áâà1,18áâà1,18áâà2
7700000000021230013
18áâà3,18áâà4,18áâà5,18áâà1,18áâà2
7700000000021230014
18áâà3,20,24áâà14,29
7700000000021230015
4áâà2,6,8,10
7700000000021490002
20áâà14,20áâà15,22,30áâà1,30áâà2
7700000000021670089
30áâà3,30áâà4,30áâà5,30áâà6,31áâà1,31
7700000000021670090
31áâà1,32áâà7,32ª1,32ª2,32ª4,32ª5,32ª6
7700000000021670091
7áâà15,7áâà16,8,9,10,10áâà2,10áâà3
7700000000021850006
20áâà4,26,26áâà1
7700000000021900002
126,128/9,128
7700000000022420019
74,74áâà2,74áâà3,76,78,80,82
7700000000022420020
50áâà2,52áâà1,52/55áâà2,62,62áâà3
7700000000022490009
64áâà1,66áâà1
7700000000022490010
33ª2,37/38,40áâà1,40áâà2,42,46,46áâà2
7700000000022820005
46áâà3
7700000000022820006
37áâà1
7700000000022830002
24áâà2,24ª1
7700000000023010012
4ª7,6,6áâà8,6áâà12
7700000000023070006
7700000000023160006
56áâà3,56áâà11,57,57,58,61áâà1,61áâà2
7700000000023390021
63áâà1,65/74áâà1,65/74áâà3
7700000000023390022
7700000000023400003
33áâà2,33áâà3,33áâà4
7700000000023580016
14,14áâà3
7700000000023990002
18áâà2,18,20,20áâà2
7700000000024010004
54ª2áâà4,54ª2áâà6
7700000000024270042
56,56áâà1,56ª2
7700000000024270043
1,1ª1,3,3áâà1,3,5,5áâà2,5ª1,5ª2,5ª3
7700000000024280009
11áâà1,12,18áâà1
7700000000024620002
25áâà1
7700000000024640013
8áâà27,8áâà28,8áâà29
7700000000024730010
10,10áâà2,11,13
7700000000025030002
19áâà2,19áâà3,19áâà4,19,20áâà1,20áâà2
7700000000025070013
66áâà13,66áâà14,66áâà16,66
7700000000025120027
7700000000025150006
21áâà2,21áâà3,21áâà4,21áâà5,21áâà7
7700000000025250003
21áâà8,21áâà9,21áâà10,21áâà11,21áâà15
7700000000025250004
21áâà17
7700000000025250005
16/14áâà6,16/14áâà7,17,19,19áâà2
7700000000025360013
5,7,7,9,9ª2,9áâà1,11,13/15,13/15áâà2
7700000000025460004
7700000000025460005
19/1,20,21áâà4,22áâà1,22áâà3,22ª1,23
7700000000025890021
91ª1,91ª1áâà1,91ª2,93,93ª1,95,95áâà1
7700000000025890053
95ª1áâà1,95ª2,97áâà1,97ª1áâà1,99
7700000000025890054
99áâà1,99ª1,103,103áâà4,103áâà6
7700000000025890055
103áâà7,103áâà8,103áâà9,103áâà10
7700000000025890056
56/40áâà5,56,58,62
7700000000025920037
25áâà2,25áâà3
7700000000026340003
37áâà8,39,39,39áâà2,39,41,41áâà1
7700000000026420033
41
7700000000026420034
3ª6,3
7700000000026570037
23áâà5,24,24áâà2,24áâà9,25,25áâà1
7700000000026630010
19áâà4,19áâà6,19áâà11
7700000000026810009
75áâà3
7700000000026820029
12áâà6
7700000000027010009
4,4áâà2,6,6áâà2,8
7700000000027040002
19áâà9,20ª1,20ª1áâà1,22ª1,22ª2,22ª3,23
7700000000032210046
11áâà26
7700000000033760037
5áâà43
7700000000034760007
1,1áâà1,1áâà2,2,3áâà1,4,5,7,8,10,11,12
7700000000037230001
7700000000037230002
28ª3,28ª4,28ª5,28ª6,28ª7,28ª8,32,34
7700000000041810015
99ª26áâà1,99ª28,99ª29,99ª30,99ª31
7700000000042720029
99ª32,99ª33,99ª34,99ª35
7700000000042720030
29ª20,29ª21,29ª22,29ª29,29ª30,29ª31
7700000000045200015
29ª32,29ª32áâà1,29ª33,29ª34,29ª35,30
7700000000045200016
31,31áâà1,31áâà2,32,33ª1áâà1,33ª1áâà2
7700000000045200017
33ª1áâà3,33ª1áâà4,34,34áâà1,34áâà2,36,40
7700000000045200018
66ª21,66ª22,66ª23,66ª24,66ª25,66ª26
7700000000050080027
66ª27,66ª28,66ª29,66ª30,113áâà1
7700000000050080028
32,32
7700000000070410019
126áâà5,126áâà6
7700000000070750040
45áâà3,45áâà4,49/22áâà1
7700000000071190028
8,14,15
7700000000072560001
10áâà1,12,12áâà2
7700000000072590001
8áâà1,19,19áâà2
7700000000072590002
7700000000072690001
6áâà1,6áâà2,6áâà3
7700000000072690002
1,2,2áâà1,6,6áâà1,6áâà2,10,12
7700000000072770001
4áâà1,4áâà2,8
7700000000072780001
1áâà1,1áâà2,1áâà3,1áâà4,2
7700000000072780002
7700000000072810001
13áâà14,14,14áâà1,14áâà2,15,15áâà1
7700000000073160015
15áâà2,15áâà3,15áâà4,15áâà6,15áâà23
7700000000073160016
17áâà1,17áâà3,20,20áâà2,20áâà3,20áâà4
7700000000073160017
20áâà5,20áâà6,20áâà12,20áâà13,21,22
7700000000073160018
22áâà1,22áâà3,22áâà4,22áâà5,22áâà7
7700000000073160019
22áâà8,22áâà10,22áâà11,22áâà12,22áâà13
7700000000073160020
7700000000073160021
22áâà18,22áâà19,22áâà20,22áâà21
7700000000073160022
22áâà22,22áâà23,22áâà24,22ª3,23,26ª3
7700000000073160023
26ª3áâà1,26ª3áâà2,26ª3áâà3,26ª3áâà4
7700000000073160024
26ª3áâà5,26ª3áâà6,26ª3áâà7,26ª3áâà8
7700000000073160025
26ª3áâà9,28,28áâà1,28áâà2,28áâà3
7700000000073160026
7700000000073350001
7700000000073370001
áâà1,áâà2,2áâà1,20
7700000000073380001
7700000000073400001
7700000000073580001
7700000000074050001
2áâà1,2
7700000000074060001
7700000000074070001
16áâà1,16áâà2,18áâà1,18áâà2
7700000000074090001
7700000000074110001
7700000000074120001
6,90
7700000000074130001
7700000200045450001
2áâà7,2áâà8,2áâà10,2áâà12,2áâà13
7700000200045450002
2áâà14,2áâà15,2áâà16,2áâà17,2,4,6áâà1
7700000200045450003
6áâà2,8áâà1,8áâà2,8áâà3
7700000200045450004
1400000200000430001
6300000300000240004
446204
6300000100007200005
(136-142)
6300000100002810008
(78-148)
6300000100007230006
(140-162)
6300000100000010012
1,2,3,4-18,45,45,45
6300000100000600003
(260-300)
6300000100000670014
(122-134)
6300000100000670001
6300000100010450001
6300000100010450002
1600000100019480001
420083
(5-15),(4-32)
1600000100019470001
1,2-60
1600000100019490001
7-54
1600000100019460001
1600000100019550001
133-162
1600000100019540001
53-67,70-98
1600000100020790001
1,2 ,2,3-6,8,10-20,22,23
7601000002900600001
17 ,17,18-21
7601000007400000003
7601000008300010001
78226807010
5000900701900060001
5000900300400030001
22,23
5000901501100160001
0100400001500000001
385750
0104
79222555000
0100400001500230001
0100400001501030001
0100400001500030001
0100400001500030002
385751
0100400001500230002
0100000100700050001
385060
79401000008
0100000100700090001
(1-15),(37-107),2,(40-136)
0100000100700110001
0100000100700160001
(3-21),(37-43),(2-24),(40-42)
0100000100700190001
0100000100700300001
0100000100700330001
(55-65),111,(18-32)
0100000100700440001
0100000100700360001
(1-89),(2-78)
0100000100700510001
(1-21),(31-35),(2-20),36
0100000100700590001
(1-7),(11-13),(17-39),(2-28)
0100000100700600001
0100000100700660001
(27-79),(28-116)
0100000100700050002
385061
(109-129),(4-38),(138-164)
0100000100700110002
(21-49),(8-40)
0100000100700160002
0100000100700190002
(30-40),(43-53)
0100000100700330002
(40-112),(49-135)
0100000100700360002
0100000100700440002
(41-105),(38-60),76,64
0100000100700590002
(91-101)
0100000100700510002
(41-125),(30-124)
0100000100700600002
(17-23),(2-10)
0100000100700660002
(15-39),(24-62)
0100000100700670001
0100000100700710001
(534-988),(515-999)
0100000100000240005
(317-371),(304-356)
0100000100000310004
0100000100000320003
(15-157),(2-110)
0100000100000360002
(243-305),(182-330)
0100000100000520004
(307-453)
0100000100000520005
(259-327),(310-392)
0100000100000550004
(1-9),(2-42)
0100000100000940001
(44-98)
0100000100000940002
0100000100001460001
0100000100001460002
0100000100001860002
(55-121),(2-120)
0100000100001970001
0100000100002220001
0100000100002220002
0100000100003660001
0100000100002340001
0100000100002340002
0100000100002690001
(15-51),(18-64)
0100000100002690002
2300000102700000001
350060
2300000102700000002
2300000103500000001
350055
2300000103500000002
2300000104800000001
2300000104800000002
2300000104100010001
350909
03401975001
2300000104100010002
350908
2300000104100010003
2300000104100150001
2300000104100150002
2300000104100150003
2300000104100240001
2300000104100240002
(80-998)
2300000104100240003
2300000104100240004
2300000104100300001
(1-149)
2300000104100300002
2300000104100300003
(151-999)
2300000104100300004
2300000104100410001
2300000104100410002
(118-998)
2300000104100410003
2300000104100410004
2300000104100620001
2300000104100620002
2300000104100620003
2300000104100620004
2300000104100640001
2300000104100640002
(76-998)
2300000104100640003
2300000104100640004
2300000104100650001
2300000104100650002
2300000104100650003
2300000104100650004
2300000104100200001
2300000104100200002
2300000104100200003
2300000104100200004
2300000101100000001
03401975002
2300000101100000002
2300000101400000001
2300000101400000002
2300000104700000001
2300000104700000002
2300000102300000001
350061
2300000102300000002
2300000100000580001
2300000100000580002
2300000100000580003
350065
2300000100001110001
2300000100001110002
2300000100001110003
2300000100001110004
2300000100001640001
2300000100001640002
2300000100001690001
2300000100001690002
2300000100002080001
2300000100002080002
2300000100002080003
2300000100002080004
2300000100002280001
(40-998),(1-999)
2300000100002280002
2300000100003800001
2300000100003800002
2300000100002610001
(12-998),(9-999)
2300000100002610002
(2-48),(1-85)
2300000100006780001
(50-192),(87-189)
2300000100006780002
(196-998),(197-999)
2300000100006780003
(1-53),(57-999)
2300000100006830001
(2-998),55
2300000100006830002
(125-129)
2300000100007080005
(143-999),(122-998)
2300000100007080006
2300000100007740001
2300000100007740002
(2-134),(1-89)
2300000100007870001
(136-178),(91-999)
2300000100007870002
(180-998)
2300000100007870003
(2-94),(1-73)
2303500100000090001
(96-130),(75-109)
2303500100000090002
(90-126),(91-125)
2303500100000670001
(76-106),(83-97)
2303500100001200001
2303500100001200002
(2-10),(3-15)
2303500100002100001
(90-98),(93-101)
2303500100001820001
(2-88),(1-89)
2303500100001820002
2303500100002110002
(30-62),(49-79)
2303500100000860003
2303500100000910001
(2-84),(1-93)
2303500100001220003
2300000100010780001
2300000100010790001
6400000100051490001
(41-99),(44-98)
6400000100051490002
410074
12,12,14,14
6400000100012860004
(78-120)
6400000100000790009
(37-81)
6400000100000790010
(50-166)
6400000100001170008
6400000100002270007
62/66
6400000100003270004
6400000100010300011
(86-130)
6400000100010680014
(4-58)
6400000100011680005
6400000100013760003
6400000100014110009
(139-163)
6400000100001480017
5002200027800000001
5002200011900000001
143020
46241834008
3100800100000090009
(5-89)
3100800100000170001
3100800100000170002
(2-28),(54-62),38
3100800100000020005
7-49
3100800100001100001
3100800100001160004
5902000022600000001
57246864005
7001700011900000001
69254832005
7001700008500000001
634505
69254848002
7000000300000220006
1-125,127,129-146,148,150-154,156-999
5502300000100520001
646740
5530
52248551000
126,128,147,149,155
5502300000100520002
646741
7800000000012580009
7800000000002810004
(100-102)
7800000000005980005
7800000000006680004
(94-178),(83-97)
2400800000100010001
663432
2420
2407
04209810001
1-81,(82-92),(99-139),98
2400800000100010002
663431
32-34,36-40,44,50-53,57,59,62,62
2400800000100240001
663435
64,64,66,41,80
2400800000100240002
2400800000100240003
2400800000100030001
(91-105),(96-108)
2400800000100030002
13-17,1-11
2400800000100040002
2400800000100170001
25,27,30,32,38-40,48-50,52,53
2400800000100170002
57,59,59,68,70,42
2400800000100170003
(4-8),(5-9)
2400800000100190001
2400800000100190002
2400800000100330001
2400800000100330002
24,24,24,(25-35),39,41,55
2400800000100390001
2400800000100390002
(73-83),(78-88)
2400800000100030003
23,25,29,36,38-42,47,50,52,60,44
2400800000100730001
2400800000100730002
(2-8),(3-9)
2400800000100940001
(10-14),(11-13)
2400800000100940002
(1-11),(17-29),(2-30)
2400800000100920001
13,15,34
2400800000100920002
2402800004200020001
662212
04237822001
2402800004200010001
(2-24),28,30,(1-9)
2402800004200050001
(34-40),(13-21)
2402800004200050002
25,27,31,33,43,47,49,53,55
2402800004200050003
(59-81)
2402800004200050004
2402800004200030001
2,4,(1-7)
2402800004200080001
(2-32),(1-19)
2402800004200060001
2402800004200070001
(22-30),(21-27)
2402800004200070002
2402800004200070003
(2-34),(1-21),(38-62)
2402800004200090001
(2-12),(1-23)
2402800004200040001
(2-12),(5-15),(16-38)
2402800004700010001
04237822002
2,4,(1-19),(8-18)
2402800004700020001
2402800004700040001
3,7,11,13,15,19,21,23,27,29,31,33,35
2402800004700030001
2402800004700030002
2,4,8,11,13,28,30,34,38,42,48,29,31
2402800005000010001
04237822003
(1-7),(12-24),(19-25)
2402800005000010002
2402800005400010001
04237822004
2402800005400020001
1,2,5,6
2402800005400040001
22,(2-14),(1-23)
2402800005400030001
2402800004400010001
662213
04237825001
2402800004400020001
2402800004400080001
2402800004400140001
9,15,(2-10),(1-5)
2402800004400180001
2402800004400040001
2402800004400200001
2402800004400060001
2402800004400070001
2402800004400090001
(2-32),36,38,(1-37)
2402800004400100001
2402800004400150001
2402800004400130001
2402800004400160001
(2-18),(1-5),15
2402800004400110001
(4-8),14,25,(1-19)
2402800004400190001
(2-6),7,9,10,12,22
2402800004400050001
5,6,7,8,(12-22),(26-36)
2402800004400170001
2402800004400210001
(2-18),19 ,22,(1-17)
2402800004400030001
2,4,(8-40),(1-15)
2402800002100050001
04237825002
(19-25),(29-39)
2402800002100050002
2402800002100040001
(2-18),(1-9),(13-19)
2402800002100010001
(4-14),(1-21)
2402800002100020001
1,2,3,4,21
2402800002100070001
(2-14),(1-11),15,17
2402800002100030001
(2-20),26,27,(1-23)
2402800002100060001
1,3,7,9,(2-8)
2402800005800010001
04237825003
(2-8),(1-27),31,35
2402800005800030001
(12-42)
2402800005800030002
2402800005800040001
2402800005800020001
(2-12),16,18,20,(1-21)
2402800005800050001
(2-30),23,34,36,(1-17)
2402800001200010001
662225
04237813005
1,5,7,8,9,10,11,(16-26)
2402800000400020001
04237813002
2402800000400010001
(2-16),(3-13)
2402800000500010001
04237813003
2402800000500030001
2402800000500020001
1,(4-14),(5-17)
2402800000500040001
6,8,10,14,18,20,22,24,30,34,36,38
2402800002300010001
04237813006
40,44,46,48,48 ,48¡,48¢
2402800002300010002
(54-72),1,3,(19-33)
2402800002300010003
2402800002300010004
4,6,13,15,17,(3-9)
2402800005900010001
04237813008
1,3,(2-8),(7-17)
2402800005900020001
(2-32),(1-9),(13-19)
2402800000600020001
04237813004
(23-29),(33-45)
2402800000600020002
2402800000600030001
1,2,3,4,5,6,29,31,35
2402800000600010001
(14-30),(9-25)
2402800000600010002
(2-14),15,20,(1-11)
2402800000600040001
2402800000600040002
5,7,14,16,18
2402800003700020001
04237813007
(2-8),(11-17)
2402800003700020002
(22-38),(21-41)
2402800003700020003
1,14,16,29,31,32,33,37,55,68
2402800003700010001
(2-10),(5-25)
2402800003700010002
(20-26),(43-51)
2402800003700010003
(36-48),(59-67),(52-64)
2402800003700010004
2402800002800200001
04237813001
(36-46),(17-33)
2402800002800200002
(2-28),(1-11)
2402800002800190001
(32-42),(17-33)
2402800002800190002
2,25,(6-24),(1-21)
2402800002800060001
(2-10),(1-53)
2402800002800040001
(14-40),57,(61-75)
2402800002800040002
2402800002800120001
2402800002800160001
7,5,(2-10)
2402800002800110001
2,3,4,6,7,9,11
2402800002800070001
2402800002800080001
2,4,(12-20),(1-35)
2402800002800020001
2,2 ,(8-18),(1-39)
2402800002800010001
2402800002800140001
2402800002800150001
(4-18),(3-11)
2402800002800230001
1,4,5,6,11,(12-18)
2402800002800090001
(26-54),(15-49)
2402800002800090002
11,13,15,(4-16),(1-7)
2402800002800050001
(3-61)
2402800002800030001
(2-14),38,(1-31)
2402800005200060001
662217
04237837001
(18-30),(37-53)
2402800005200060002
(42-66),(57-61)
2402800005200060003
(2-44),(1-41)
2402800005200010001
2400000100003220003
7400000100001140011
(331-339)
7400000100007560012
7400000100003600001
41
7400000100002160008
(116-134)
7400000100003930005
(1-999),(6-998)
7400000600000500004
(165-171)
6300000100003580009
(125-127)
6300000100005140006
(122-130)
6300000100005140007
(2-14),(9-11)
6300000100004040001
6300000100004040002
6901700100000150001
172110
28234501000
6901700100000190001
(2-46),(1-71)
6901700100000600001
6901700100000930001
(2-56),(1-53)
6901700100000190002
172111
(24-998),(17-999)
6901700100000150002
172112
(48-998),(73-999)
6901700100000600002
1-99,101-999
6901700100000930002
(181-999),(202-214)
3800000300000500004
664048
(234-998)
3800000300006970003
8áâà35,8áâà36,8áâà37,8,15,15áâà2,17
7700000000000220007
17áâà2,23
7700000000000220008
6ª2,6ª3,6ª4,6ª4áâà5,8ª1,8ª2,8ª2áâà1,8ª3
7700000000000550031
23áâà20,23áâà21,23áâà22,25/1ª1,25/1ª2
7700000000000780009
7700000000002700017
11áâà20,11áâà21,11áâà22,11áâà23
7700000000002760008
266áâà4,266áâà5
7700000000004760260
20/1ª2,22
7700000000005930005
2áâà4,2áâà5,2áâà12,2áâà1,2áâà2
7700000000009620015
38,38áâà2,39áâà1,39áâà2,39áâà3,39áâà13
7700000000010780008
7700000000015870001
30,30ª1,30ª2,30ª2áâà1,30ª2áâà3,30ª3
7700000000016150031
74áâà,74áâà8,74ª1,74ª1áâà6,74ª1áâà7
7700000000016850055
30áâà23,30áâà26
7700000000023860011
21áâà1,22ª1,22ª1áâà1,23áâà1,25áâà1,26
7700000000039340007
26áâà2,26áâà3,26,26áâà1,27,27áâà1
7700000000039340008
7700000000039340009
27áâà7,27áâà8,27áâà9,27áâà10,27áâà11
7700000000039340010
27áâà12,27áâà13,27áâà14,28áâà1,30áâà1
7700000000039340011
32áâà1,33áâà1
7700000000039340012
55áâà1,56áâà1,57áâà1,57áâà2,58áâà1
7700000000039350010
58áâà2,59áâà1,60,60ª1,60ª2,62,62áâà2
7700000000039350011
62áâà3,63áâà1,63áâà2,64,65áâà1,65áâà3
7700000000039350012
66,67áâà1,67áâà4,67áâà5,69,69áâà1
7700000000039350013
69ª1,70,70áâà2,70/10,70/10áâà1
7700000000039350014
70/10áâà2,70áâà1,70áâà2
7700000000039350015
83áâà1,84áâà1,85,86,87,87áâà1,87áâà2
7700000000039360006
87ª1,88áâà1,129áâà1,133,135áâà1,135áâà2
7700000000039360007
126ª4,126ª5,126ª6,126ª7,126ª8,126ª9
7700000000039370017
131,131ª2,131ª2áâà1,131ª2áâà2,131áâà1
7700000000039370018
131áâà2,131áâà3,131áâà1,131
7700000000039370019
136áâà1,136áâà3,151áâà1,153áâà1
7700000000039370020
155áâà9,155áâà11,155áâà12,155áâà13
7700000000039370021
155áâà14,156,156áâà1,156áâà2,156áâà3
7700000000039370022
156áâà4,156áâà5,157,157áâà1,157áâà5
7700000000039370023
157áâà1,158áâà1,158áâà2
7700000000039370024
5,6,6áâà1,6áâà2,6áâà3,6áâà4,6áâà5
7700000000070550034
6áâà6,6áâà7,6áâà8,6áâà9,6áâà10,7ª1,7ª2
7700000000070550035
8ª1,8ª1áâà1,8ª2,8ª3,9,9áâà1,9áâà3,10
7700000000070550036
128áâà5,128áâà6,128áâà7,128áâà8
7700000000070750041
128áâà9,128áâà10,128áâà11,128áâà12
7700000000070750042
128áâà13,128áâà14,128áâà15,128áâà16
7700000000070750043
128áâà17,128áâà18,128áâà19,128áâà20
7700000000070750044
1áâà35,1áâà36,1áâà37,1áâà38,1áâà39
7700000000073050013
1áâà40,1áâà41,1áâà41,1áâà42,1áâà42
7700000000073050014
1áâà43,1áâà44,1áâà45,1áâà48,1áâà48
7700000000073050015
1áâà51,1áâà52,1áâà53,1áâà54,1áâà56
7700000000073050016
1áâà58,1áâà59,1áâà60,1áâà61,1áâà62
7700000000073050017
1áâà64,1áâà65,1áâà66,1áâà70,1áâà73
7700000000073050018
1áâà73,1áâà74,1áâà75,1áâà76,1áâà77
7700000000073050019
1áâà1,1áâà2,3,3áâà1,3áâà2,3áâà3,3áâà4
7700000000073320001
7700000000073320002
7700000000073320003
3áâà16,3áâà17,3áâà18,3áâà19,3áâà20
7700000000073320004
3áâà21,3áâà22,3áâà23,3áâà24,5,5áâà1
7700000000073320005
5áâà2,5áâà3,5áâà4,6,6áâà1,6áâà2,6áâà3
7700000000073320006
6áâà4,6áâà5,6áâà6
7700000000073320007
14áâà2
7700000200013110006
1áâà2,3áâà8,3áâà9,3áâà10
7700000200013110007
4áâà1,4áâà2,4áâà3,4áâà4,6,8áâà1,8áâà2
7700000200022050004
7700000200022050013
áâà1,2áâà1,2áâà2,3,4áâà1,4áâà2,4áâà3
7700000200027290003
4áâà4,4áâà5,5áâà1,5áâà2,5áâà3,6áâà2
7700000200027290004
1,2áâà1,2áâà2,2áâà3,3,3,4,4áâà1,5
7700000200031970002
6áâà4,6áâà5,7
7700000200045220002
7áâà16,7áâà17
7700000200045280005
7700000200045430001
(53-253),(72-288)
4000000100005220004
(255-295),(290-320)
4000000100005220005
(322-998)
4000000100005220006
248031
4001500100000270001
249096
4011
29223501000
6-73
4001500100000270002
249094
97 
3400000100007420006
3401100100000170001
(16-26),(1-27)
3401100100000300001
4¢,4£,4¤
3401100100001150001
(14-108),(11-107)
3401100100005080001
(4-44),(1-43)
3401100100000480001
(2-28),(11-25)
3401100100000180001
(4-10),(1-7)
3401100100000190001
3401100100000830001
(2-10),(1-19)
3401100100001280001
3401100100000860001
(4-24),(1-51)
3401100100005000001
(4-72),(1-63)
3401100100000150001
3401100100000970001
403894
3401100100000770001
3401100100001480001
(48-66),(57-75)
3401100100001430001
3402100002700010001
403975
18238808004
3402100002700020001
3403100100001980002
(30-50),(29-37)
3403100100001830003
3403100100001240001
9,12,18
3400000100029320001
61,63
2900000400000010003
2900000400000390004
6900000102000000001
2300000100008380004
2300000100010190001
2300000100010190002
34,(50-54),(31-43)
7600000100003460004
150065
1/8
5000400100000380003
27/10
5000400100000400003
13,(23-39)
1600000100021260001
1600000100021260002
1600000100015880006
1600000100000630005
1600000100015830005
1-71,73,75
6400000400001340001
413850
6439
63407000000
72,74,76,77-89
6400000400001340002
413857
15,19,21-23,25-33,35,36 ,36¡,36¢,37,39
6400000400000060001
413864
41,43,45,47,51,53,57
6400000400000060002
1,1 ,3-10,12,13,16,18,20
6400000400000060003
413860
3-34,36,38,40,42,44,46,48,50-61
6400000400000100001
413853
39,41,43,45,47,49
6400000400000100002
45-106
6400000400000110001
413851
210,211
6400000400000110002
413859
6,8,15
6400000400001700001
7-108
6400000400000140001
413865
109-170
6400000400000140002
6400000400000830001
6400000400000830002
413863
1-68,70,72,74-84
6400000400000180001
69,71,82 ,82¡,82,85-102
6400000400000180002
413841
6400000400000200001
6400000400000200002
47-65
6400000400000200003
31,33,35,37,39,41,43,45
6400000400000200004
32,34,36,38,40,42,44,46,48
6400000400000200005
1-39,45-69
6400000400000210001
71,73,75,77,79,40-44
6400000400000210002
6400000400000220001
97-120
6400000400000220002
5,115,108,110,112,114,116,118,120,122
6400000400000260001
124,128,130,132,134,136,138,140,142,144
6400000400000260002
146,148
6400000400000260003
46-107,109,111,113,117,119,121,123,125
6400000400000260004
127,129,131,133,135,137,139,141,143,145
6400000400000260005
2-59
6400000400000290001
91-177
6400000400000290002
45-108
6400000400000310001
113-156
6400000400000310002
72-107
6400000400000320001
122
6400000400000320002
6400000400000330001
53-80
6400000400000330002
32,34,36,38,40,42,44,46,48,50,52,3 ,5 
6400000400000330003
1-51,82-200
6400000400000330004
45-110
6400000400000340001
111-183
6400000400000340002
1-76,78,80,82,84,86
6400000400001330001
88-152
6400000400001330002
6400000400000010001
6400000400000030001
1-73,75,77,79,81,83,85,87,89,91
6400000400000430001
74,76,78,80,82,84,86,88,90,92-141
6400000400000430002
6400000400000440001
29,31-33
6400000400000440002
413849
1 ,37-51,30,36
6400000400000440003
3-88,90
6400000400000480001
89,91-118
6400000400000480002
37-107,109,111,113,115
6400000400000520001
108,110,112,114,116-135
6400000400000520002
1-54,56,58,60,62,64,66,68,70
6400000400000530001
98-131
6400000400000530002
76-96
6400000400000530003
91,93,95,97,99,101,103,105,107,109,103¡
6400000400000530004
111,113,115,117,121,123,125
6400000400000530005
5-105,107,109,111,113,115,117,119,121
6400000400000540001
108-163,165,167,169,171,173,175,177,179
6400000400000540002
181,183,185,187,189,191,193
6400000400000540003
164,166,168,170,195-203
6400000400000540004
52,54,58,60,62,64,66
6400000400000570001
45,47,49,51,53,55,57,59,61,63,65,67,69
6400000400000570002
71-108
6400000400000570003
109-156
6400000400000570004
3-91
6400000400000600001
118-166
6400000400000600002
6400000400000640001
1,2,6-14
6400000400000640002
3,5-33,46-108
6400000400000650001
6400000400000650002
114-136
6400000400000650003
7-65,67,69,71
6400000400000700001
66,68,70,72-131
6400000400000700002
6400000400000710001
28-36
6400000400000710002
6400000400000550001
18-38,40,42,44
6400000400000550002
52-64
6400000400000550003
66-100
6400000400000550004
40-98,107,109,111,113,115,117,119,121
6400000400000720001
123,125,127,129,131
6400000400000720002
106,108,110,112,114,116,118,120,122,124
6400000400000720003
126,128,130,132,134-185
6400000400000720004
1-73,75,77,79,81,83,85,87,89,91,93,95,97
6400000400000770001
99,74
6400000400000770002
6400000400000230001
6400000400000230002
55,30,50,62
6400000400000800001
6400000400000800002
13-75,77-119
6400000400000850001
6400000400000850002
13-25
6400000400000890001
6400000400000890002
7¡,7¢,45-100
6400000400000890003
2-121
6400000400000900001
130-142
6400000400000900002
2-75
6400000400000930001
76-107
6400000400000930002
1-79,81,83
6400000400000950001
80,82,84-155
6400000400000950002
6400000400000960001
2-105
6400000400000980001
138-158
6400000400000980002
1,3,5,7,9,11,13,15,17,19,21,23,25,43,8 
6400000400001120001
27,29,31,33,35
6400000400001120002
6400000400001120003
17-91
6400000400001120004
1-46,48,50
6400000400001140001
56-76
6400000400001140002
1,3,5-15
6400000400001160001
2,2 ,4,4 ,6 
6400000400001160002
12,14,16-35
6400000400001160003
2,4,5,7
6400000400001710001
118,120,122,124,126,128,130,132,134,136
6400000400001210001
138,140,141,143,145,147,151,153,155,157
6400000400001210002
159,161
6400000400001210003
1-68,103-107
6400000400001210004
71-79,81-95,80,100,102,104
6400000400001210005
109-133
6400000400001210006
1-46,48,50,52,54,56,58,60,62,64,66,68
6400000400001250001
47,49,51,53,55,57,59,61,63,65,67,69
6400000400001250002
70,72,74,76,78,80,82,84,86,88,90,92,94
6400000400001250003
46-100,102,104,106
6400000400001290001
103,105,107-134
6400000400001290002
6400000600001900001
412911
6441
63413000000
6400000600001900002
(55-113)
6400000600001900003
412909
(54-108)
6400000600001900004
(115-207)
6400000600001900005
412913
(110-186)
6400000600001900006
6400000600000170001
412906
6400000600000170002
6400000600000170003
6400000600000170004
(58-74)
6400000600000170006
(107-183)
6400000600000170007
(76-160)
6400000600000170008
6400000600000220001
6400000600000220002
(101-223)
6400000600000220003
(96-232)
6400000600000220004
6400000600000260001
6400000600000260002
6400000600000260003
6400000600000260004
6400000600003330001
72-162
6400000600003330002
6400000600000550001
25-47
6400000600000550002
412905
6400000600000640001
6400000600000640002
6400000600000640003
6400000600000640004
(87-167)
6400000600000640005
(114-180)
6400000600000640006
6400000600000700001
6400000600000700002
(71-105)
6400000600000700003
412904
6400000600000700004
6400000600000820001
6400000600000820002
(41-179)
6400000600000820003
412921
(28-174)
6400000600000820004
6400000600000970001
6400000600000970002
6400000600000970003
(16-74)
6400000600000970004
6400000600000970005
(76-94)
6400000600000970006
6400000600000980001
30-93
6400000600000980002
94-243
6400000600000980003
6400000600001060001
412950
10-62
6400000600001060002
6400000600001140001
82-102
6400000600001140002
(1-185)
6400000600001860001
6400000600001860002
(187-253)
6400000600001860003
(164-222)
6400000600001860004
6400000600001180001
6400000600001180002
6400000600001180003
(56-114)
6400000600001180004
(73-231)
6400000600001180005
(116-240)
6400000600001180006
6400000600001270001
6400000600001270002
(59-157)
6400000600001270003
(86-208)
6400000600001270004
(159-215)
6400000600001270005
(210-320)
6400000600001270006
6400000600003380001
6-64
6400000600003380002
6400000600001390001
6400000600001390002
6400000600001390003
6400000600001390004
6400000600001590001
6400000600001590002
6400000600001590003
6400000600001590004
(115-209)
6400000600001590005
(124-204)
6400000600001590006
(227-267)
6400000600001590007
(244-278)
6400000600001590008
6400000600001730001
6400000600001730002
(117-243)
6400000600001730003
(146-266)
6400000600001730004
6400000600001840001
6400000600001840002
6400000600002160001
6400000600002160002
(59-181)
6400000600002160003
(78-200)
6400000600002160004
6400000600002290001
6400000600002290002
6400000600002290003
6400000600002290004
6400000600002290005
6400000600002290006
3/13
6400000600002400001
4-69
6400000600002400002
6400000600000910001
200-235
6400000600000910002
6400000600002930001
6400000600002930002
6400000600003080001
123-253
6400000600003080002
6400000600003150001
6400000600003150002
6400000100007220006
410023
339
6400000100011790005
410034
6400000100007220007
410042
6400000100000780001
410082
6400000100000780002
6400000100003870006
6400000100013440006
25 ,19
3300500100001040001
601505
3304
17420000000
11,15,15 ,73 ,5,17,13
3300500100001040002
601503
16,10,14
3300500100001040003
601501
12,(62-72),5,(15-45),8,6,10,10 
3300500100000570001
3300500100000570002
3300500100001870001
3300500100001870002
17 ,15 
3300500100000920001
3300500100000920002
5 ,1 ,2 ,3 ,4 
3300500100000900001
12 ,15,8 ,9,10,11,12,7,6/23
3300500100000900002
26 
3300500100000510001
1-26,27-999
3300500100000510002
45,47,60-62,72/29
3300500100000690001
1-44,46,48-59,63-71,73-999
3300500100000690002
2/7-31,33-55,57,59-999
3300500100001760001
32,56,58
3300500100001760002
1-70,72,78-999
3300500100001180001
74,76,71,73,75,77
3300500100001180002
1-40,41,42,43,45,47-54
3300500100000500001
40 ,40¡,42 ,42¡,44,46,55-999
3300500100000500002
1,3,5,7,9,11,13,15,17,19,21,23,25,27,4,8
3300500100000230001
16,18,20,22,24,26,28,31,33,35,37,39-47
3300500100000230002
3300500100001060001
3300500100001060002
3300500100000410001
1,2,4-18,20-999
3300500100000410002
601508
3300500100001370001
5-42
3300500100001370002
601507
7300000100007060001
7300000100007060002
432048
84,84¡
5200000100005650012
477
5200000100010340005
5200000201300000001
22421000003
5200000201800000001
606055
22421560001
5201600000700000001
606058
5214
22231560000
1,2,4,5,9-12,18
5200000100020830001
1,1,5,8,10,12,12,12,12,12,14
2700000100000010004
1,3,4,5,7,10
2700000100001490001
171
7200000100003080024
(2-28),(13-63)
2404300000100230001
(1-57),(2-80)
2400001700000200001
2400001700000200002
(24-28),18
2400001700003740001
2400001700001050001
2400001700001050002
17,18,19,21,22,24
2400001700003750001
2402800005200020001
(2-20),24,26,28,(1-41)
2402800005200140001
(32-42)
2402800005200140002
2402800005200110001
2402800005200040001
2402800005200080001
(2-10),(1-29),(14-22),26,28,30
2402800005200030001
2402800005200120001
2402800005200100001
(2-14),(1-7),11,13
2402800005200090001
2402800005200150001
2402800005200160001
2402800005200170001
(2-10),(1-9),13,19,23
2402800000800010001
04237837002
(14-32),(27-49)
2402800000800010002
(36-50),(53-59),65,67,69
2402800000800010003
(54-64),86,(73-85)
2402800000800010004
(2-50),(1-23),47,(27-41)
2402800002500010001
662220
04237837011
2,8,10,24,26,28,(14-20)
2402800002500020001
33,35,(1-29)
2402800002500020002
1,9,11,13,20,24,26
2402800002500040001
1,1¡,2,4,5,6,7
2402800002500030001
(2-60),(1-15),21
2402800003300010001
04237837005
(25-41),(47-59)
2402800003300010002
2,(6-16),(1-9),13,15,17
2402800003300030001
1,2,3,4,6,10,12,16,20,22,26
2402800003300040001
(7-37),(30-38)
2402800003300040002
1,2,2 ,4,4 
2402800003300020001
37,41,49,51,53,57,59,63,65,67
2402800003800040002
04237837007
36,38,42,44,54,58,60,62,64,68
2402800003800040001
72,76,82,84,86,90
2402800003800040003
85,87
2402800003800040004
2,4,6,10,14,16,22,24,30,36,38
2402800003800020001
40,42,50,52,(1-13)
2402800003800020002
(17-27),(31-41),(51-77)
2402800003800020003
(2-44),(1-21),(25-49)
2402800005100010001
04237837009
(48-82),(53-71)
2402800005100010002
(86-106),(77-87)
2402800005100010003
2402800005100020001
(2-6),(1-49),(10-28)
2402800005600010001
04237837010
2402800001600010001
04237837003
(2-16),22,(1-27)
2402800001600030001
(2-14),18,18 ,(1-27)
2402800001600020001
1,19,20
2402800001600040001
2402800002900010001
04237837004
2402800002900020001
2402800002900030001
2402800002900040001
2402800002900050001
(2-6),(1-15),(10-32)
2402800003400010001
04237837006
(19-29),(36-66),78 ,(33-81)
2402800003400010002
2402800003400020001
2402800004300010001
04237837008
(4-14),(1-9)
2402800004300020001
2402800004300050001
2402800004300060001
2402800004300030001
2402800004300040001
2402800001400010001
662219
04237810001
2402800001400140001
2402800001400060001
2402800001400110001
2402800001400090001
2402800001400070001
1,2,4,4 ,5
2402800001400180001
2402800001400040001
2402800001400130001
(2-18),(1-7)
2402800001400150001
2402800001400030001
2402800001400050001
2402800001400080001
2402800001400160001
2,16,(1-9)
2402800001400170001
(4-36),(1-29)
2402800000200020001
04237810002
2402800000200070001
(4-36),(1-21)
2402800000200010001
2402800000200030001
2402800000200060001
(2-20),(3-29)
2402800000200050001
2402800000200040001
2402800002600010001
04237810004
2402800002600020001
2402800002600030001
1,3,(2-16)
2402800002600040001
2402800000900010001
04237810003
(2-46),(1-37)
2402800000900020001
2400000900000020001
663302
2457
04429000000
1,2,3,6 ,8,10,12,13
2400000900000020002
663305
8,9,10,12,13,15,17,18,19,20,20 ,20¡,21
2400000900000250001
2400000900000250002
4,4 ,(6-12),14,14 ,16,16 ,(18-24)
2400000100009000001
2400000100009000002
2400000100009500001
2,(1-7)
1200400100000250001
425061
1225
1203
88212501000
(74-1000)
1200400100000250002
425062
1200400100000250003
(4-72)
1200400100000250004
425060
(9-81)
1200400100000250005
1200400100000190001
1200400100000190002
(82-1000)
1200400100000190003
1200400100000190004
(17-89)
1200400100000190005
2,(12-80)
1200400100000190006
1200400100000120001
1200400100000120002
1200400100000120003
(16-1000)
1200400100000120004
1200400100000040001
1200400100000040002
1200400100000040003
(6-1000)
1200400100000040004
1200400100000280001
1200400100000280002
1200400100000280003
(2-8),(20-1000)
1200400100000280004
1200400100000130001
1200400100000070001
(79-999)
1200400100000010001
(70-1000)
1200400100000010002
1200400100000010003
1200400100000010004
1200400100000200001
(42-1000)
1200400100000200002
1200400100000200003
1200400100000200004
0700000100002290001
360000
0725
83401000000
0700000100002290002
0700000100002290003
0726
0700000100002290004
0700000100001600001
0700000100001600002
(67-99)
0700000100001600003
(68-114)
0700000100001600004
0700000100001800001
0700000100001800002
(75-107)
0700000100001800003
(78-106)
0700000100001800004
0700000100005000001
0700000100005000002
0700000100005000003
0700000100005000004
0700000100001720001
0700000100001720002
0700000100001720003
(42-70)
0700000100001720004
0700000100005240001
0700000100005240002
(119-205)
0700000100005240003
(98-170)
0700000100005240004
0700000100003120001
0700000100003120002
(112-400)
0700000100003120003
(109-201)
0700000100003120004
0700000100001280001
0700000100001280002
(137-421)
0700000100001280003
(138-422)
0700000100001280004
0700000100002660001
0700000100002660002
(149-199)
0700000100002660003
(96-200)
0700000100002660004
(1-267)
0700000100001460001
(2-256)
0700000100001460002
(269-399)
0700000100001460003
(258-400)
0700000100001460004
0700000100003250001
(2-150)
0700000100003250002
(141-199)
0700000100003250003
(152-200)
0700000100003250004
0700000100003550001
(2-226)
0700000100003550002
(175-299)
0700000100003550003
(228-300)
0700000100003550004
(2-44),(1-33)
6700400009200010001
215033
66208816001
6700400009200040001
6700400009200030001
6700400009200060001
6700400009200070001
6700400009200020001
(1-35),(2-6)
6700400009200050001
104,73 
3800000300000120003
108,118,120,210¡,214 ,218/1,218/2,218/3
3800000300000480003
3800000300000600003
3800000300002680004
3800000300006140002
7700000000002390005
16áâà2,16
7700000000005100068
23ª2,24,24ª2,24ª3,26,26ª5áâà1,26ª5áâà2
7700000000010730032
7700000000015100006
7700000000015570002
9áâà4,9áâà5
7700000000015640004
7700000000015850006
119áâà629,119áâà630,123,123
7700000000018560206
14áâà1,14áâà1,14,14áâà1,14áâà2
7700000000021670026
56/15,56/15áâà1,56/15áâà2,56/15áâà3
7700000000021740013
4áâà1,10
7700000000021750002
10áâà7,12,12
7700000000021850007
12,14,14áâà2
7700000000022070003
29/7áâà10,29/7áâà11,29/7áâà12
7700000000022870013
2áâà28,2áâà29,2áâà30,2áâà31
7700000000070550037
2áâà32,2áâà34,3,4,4áâà1,4áâà2,4áâà4
7700000000070550038
0500000100000210001
367002
0561
82401365000
(77-101),(2-128)
0500000100000210002
367010
0562
82401370000
0500000100000210003
367013
(55-67)
0500000100000210004
367003
0500000100000210005
367030
(20-50),(19-49)
0500000100000280001
367027
(2-28),(19-47)
0500000100000300001
0500000100000440001
0500000100000440002
0500000100000470001
0500000100000550001
(1-95),(2-100)
0500000100000580001
(97-999),(110-156)
0500000100000580002
(1-115),(2-84)
0500000100000610001
367000
(86-144),(133-167)
0500000100000610002
1-29,(30-42)
0500000100000630001
367008
0560
82401362000
(31-85),(44-94)
0500000100000630002
367029
0500000100000690001
367012
11-110
0500000100000690002
(1-33),(2-60)
0500000100000750001
(3-27),(8-10)
0500000100000770001
(53-87),(4-6)
0500000100000770002
(29-51),(24-62)
0500000100000770003
(1-33),(2-78)
0500000100000800001
367015
(35-259),(80-260)
0500000100000800002
0500000100000820001
(1-57),(2-70)
0500000100000830001
4,6,12,14,1/2,3,5,(19-23)
0500000100000920002
0500000100000920003
(27-45),(16-38)
0500000100000920004
0500000100000930001
367009
(19-37),79,106-148,(38-104)
0500000100000930002
367032
0500000100000980001
(28-94),(21-97)
0500000100000980002
0500000100001010001
0500000100001030001
0500000100001040001
0500000100001050001
0500000100001080001
(78-104),(85-121)
0500000100001080002
(1-59),(2-12)
0500000100001120001
48,50,50
0500000100001120002
0500000100001130001
(1-29),2,4
0500000100001190001
(6-40),(31-43)
0500000100001190002
3,3,5,5,11,17,19,27,29,31
0500000100001190003
(176-184),(157-163)
0500000100001250001
(2-174),(1-155)
0500000100001250002
(11-37),(18-76)
0500000100001270001
367026
0500000100001270002
(78-260)
0500000100001270003
0500000100001300001
0500000100001300002
0500000100001340001
0500000100001350001
(38-54)
0500000100001350002
0500000100001350003
0500000100001350004
(53-61),(20-36)
0500000100001350005
(1-23),(2-8),61,(65-85),(62-94)
0500000100001410001
43,43,45,45,45,(49-59),63
0500000100001410004
367018
27,39,39,41
0500000100001410005
367007
(31-37),(10-18),24,(30-46)
0500000100001410006
(1-51),(2-94)
0500000100001430001
(96-150),(55-103)
0500000100001430002
0500000100001450001
0500000100001460001
0500000100001480001
0500000100001500001
9-45
0500000100001500002
0500000100001530001
41,41,(47-51),53,53,53,53,53
0500000100001530003
57,57,57,59,61,61,61,61,63,63,63
0500000100001533000
63
0500000100001533001
0500000100001570001
(64-114),(59-121)
0500000100001570002
0500000100001590001
(103-117),(216-230)
0500000100001650001
0500000100001650002
(2-214),(33-101)
0500000100001650003
0500000100001680001
0500000100001680002
0500000100001690001
(48-100),(37-77)
0500000100001690002
(25-59),(10-46)
0500000100001720001
(2-8),(1-23)
0500000100001720002
(62-124),(63-83)
0500000100001720003
0500000100001800001
0500000100001860001
0500000100001860002
0500000100001860003
0500000100001890001
0500000100001940001
(95-99),104
0500000100001940002
0500000100001960001
0500000100001970001
0500000100001980001
0500000100002010001
(5-47),(4-46)
0500000100002050001
(71-129),(60-134)
0500000100002050002
0500000100002090001
72,72
0500000100002090002
0500000100002100001
(62-114),(61-115)
0500000100002100002
0500000100002130001
0500000100002220001
0500000100002240001
0500000100002240002
0500000100002260001
(24-46),(3-35)
0500000100002260002
(1-77),(2-77)
0500000100002290001
0500000100002380001
0500000100002540001
(116-124),(121-133)
0500000100002540002
(135-137),114,(126-134)
0500000100002540003
(1-62),(2-68)
0500000100002620001
0500000100002690001
(2-164),(21-141)
0500000100002690002
0500000100002710001
(46-140),(85-103)
0500000100002710002
0500000100002760001
0500000100002770001
0500000100002800001
0500000100002810001
0500000100002860001
(96-168),(61-95)
0500000100002860002
18
0500000100002880001
59,59
0500000100002880002
0500000100003050001
0500000100003060001
(21-53),(8-46)
0500000100003060002
(55-57),(48-52)
0500000100003060003
0500000100003070001
0500000100003160001
0500000100003160002
0500000100003240001
0500000100003240002
(84-200),(73-199)
0500000100004050001
0500000100025330001
0500000100025330002
0500000100025740001
(19-49)
0500000100025740002
0500000100800000001
367950
82401695000
0500000100800010001
367022
0500000100800020001
82401658000
0500000100800040001
(1-27),(2-132)
0500000100800050001
0500000100800060001
0500000100800070001
0500000100800080001
(1-129),(2-102)
0500000100800090001
(1-153),(2-156)
0500000100800100001
0500000100800110001
0500000100800150001
0500000100800160001
0500000100800170001
(1-111),(2-162)
0500000100800180001
(1-25),(2-98)
0500000100800190001
(1-107),(2-104)
0500000100800200001
0500000100800210001
0500000100800220001
0500000100800230001
0500000100800240001
0500000100800250001
0500000100800260001
0500000100800270001
0500000100800280001
0500000100800290001
0500000100800300001
0500000100800310001
0500000100800320001
0500000100900170001
367039
0500000400000020001
368304
0545
82420000000
(2-48),(3-37)
0500000400000050001
368301
0500000400000050002
(1-39),(4-56)
0500000400000060001
368302
(2-44),(43-103)
0500000400000120001
368300
0500000400000130001
0500000400000150001
0500000400000150002
(6-56),(15-65)
0500000400000150003
(1-25),2,4
0500000400000160001
(6-14),(27-43)
0500000400000160002
(1-7),30
0500000400000190001
0500000400000190002
(9-79),(16-78)
0500000400000190003
0500000400000200001
0500000400000210001
(1-5),(2-12),(18-26)
0500000400000220001
7,9,11,14,16
0500000400000220002
(1-15),12,14
0500000400000290001
16,(17-21),(28-44)
0500000400000290002
0500000400000300001
(26-146)
0500000400000300002
1,3,(49-153)
0500000400000300003
4-7
0500000400000330001
368305
0500000400000340001
0500000400000370001
(1-29),(4-34)
0500000400000370002
(1-65),(2-26),(38-100)
0500000400000380001
(1-37),(24-36)
0500000400000400001
(2-10),14,18,20,22
0500000400000400002
(1-21),(25-35)
0500000400000410001
(2-24),(28-38)
0500000400000410002
(1-71),(2-96)
0500000400000450001
(73-105),(100-112)
0500000400000450002
0500000400000470001
1,2,4,5,6,7
0500000400000510001
0500000400000510004
0500000400000570001
0500000400000570002
(28-52),(60-86),(31-79)
0500000400000570003
1-13,17,19,21
0500000400000610001
2-29,(34-44),(35-47)
0500000400000650001
0500000400000660001
(13-67),(28-72)
0500000400000660002
0500000400000710001
0500000400000720001
23-38
0500000400000720002
0500000400000730001
0500000400000750001
0500000400000760001
0500000400000770001
(1-11),(6-14),39-83
0500000400000870001
15,18,19,21,23,27,29
0500000400000870002
0500000400000880001
0500000400000880002
0500000400000890001
0500000400001020001
0500000400001130001
(13-75),(14-78)
0500000400001130002
0501700000600240001
368547
0522
82235820001
0501700000600250001
0501700000600260001
0501700000600270001
0501700000600280001
0501700000600290001
0501700000600300001
0501700000600310001
7600000100005990007
56/18,(58-86),88/23
7600000100003980005
86-89,98,101,137,140-143,145-146,148,154
7600000100007130003
7600000100012470001
1-13,15-100
7600000100012470002
50,52,54,56,58,60,62-103
4200300100000860002
(21-25),(28-34)
7400000100000010003
7400000100000010004
(100-110)
7400000100001140012
7400000100001140013
7400000100001140014
7400000100001140015
(139-155)
7400000100001140016
(295-305)
7400000100007560013
7400000100009230004
(24-42),25
7400000100000070004
7400000100011140003
54,86
7400000100001140017
7400000100001140018
(78-84)
7400000100001140019
(88-98)
7400000100001140020
(215-287)
7400000100007560014
41-74
7400000100008260003
7102100006800000001
301900
7134
70242845001
7102100002900000001
301909
70242825001
7102400013300000001
70248820019
7102100000200000001
301914
70242815002
7102100000300000001
301905
70242885002
7102100000400000001
301922
70242805003
7102100000500000001
301921
70242850002
7102100000600000001
301916
70242810002
7102100000700000001
70242810003
7102100000800000001
70242810004
7102100000900000001
70242845002
7102400008500000001
70248820014
7102400011200000001
301208
70248820025
7102400027400000001
70248808013
(44-80)
6400000100003910006
(59-65)
6400000100013940001
6400000100051600001
5002200016000000001
143083
46241804006
5002200024400000001
143021
46241840014
5203700100000540001
606650
5228
22247501000
(57-75),(48-72)
5203700100000540002
606651
5203700100000520001
(45-51),(44-50)
5203700100000520002
5203700100001070001
(23-25),(20-26)
5203700100001070002
5203700100000300001
(7-57),(2-60)
5203700100000300002
(59-1001),(62-1000)
5203700100000300003
606654
5203700100000890001
(23-41),(28-38)
5203700100000890002
5203700100000610001
606653
(21-101),(20-100)
5203700100000610002
5203700100000240001
(25-101),(26-100)
5203700100000240002
5203700100000220001
(51-77),(42-50)
5203700100000220002
(79-1001),(52-1000)
5203700100000220003
5203700100000670001
(25-49),(28-46)
5203700100000670002
(51-1001),(48-1000)
5203700100000670003
(1-39),(2-22)
5203700100000710001
5203700100000710002
(41-101),(40-100)
5203700100000710003
5203700100000210001
(15-67),(10-74)
5203700100000210002
(69-93),(78-100)
5203700100000210003
5203700100000260001
(21-1001),(14-1000)
5203700100000260002
(1-17),(6-18)
5203700100000780001
(19-1001),(20-1000)
5203700100000780002
(101-115)
6300000100001510007
(207-211)
6300000100000030013
19,20,20,21,22,23,24,25,32,36,36
2700000100002200002
6700400002100040001
6700400002100060001
6700400002100070001
6700400002100080001
6700400002100100001
6700400002100110001
6700400002100090001
6700400002100120001
6900000600002770003
4701800000800000001
187052
4716
41248842001
4701800056300000001
187002
41248843005
4701800001000000001
187032
41248843001
4701800059000000001
187029
41248864006
4701800057200000001
187030
41248848002
4701800054100000001
187024
41248816004
4701800056500000001
187070
41248844002
4701800055500010001
41248804002
4701800055500000001
4701800057300000001
187021
41248852012
4701800056600000001
187046
41248844010
4701800056800000001
41248844004
4701800059800000001
41248844005
4701800078200000001
41248844001
4701800060200000001
187025
41248864010
4701800051900000001
41248560001
4701800055100000001
41248842012
4701800058300000001
41248860009
4701800058400000001
41248860002
4701800050200000001
41248832013
4701800050300000001
187047
41248832002
4701800050400000001
41248832003
4701800056900000001
41248844007
1-59,61
4701800051100000001
187037
41248508001
4701800059100000001
41248864002
4701800058500000001
41248860003
4701800054200000001
187090
41248820003
4701800052500000001
187080
41248830003
4701800059200000001
41248864003
4701800052100000001
41248848004
4701800050500000001
41248832004
4701800050600000001
187051
41248832005
4701800057700000001
187028
41248852003
4701800052700000001
41248830006
4701800058600000001
187060
41248860004
4701800055000000001
41248842003
4701800058700000001
41248860005
4701800054400000001
187045
41248842005
4701800052200000001
41248848005
4701800078500000001
41248842007
4701800055200000001
4701800055800000001
41248804005
4701800057600000001
187022
41248852006
4701800001700000001
41248832009
4701800060300000001
187031
41248804011
4701800058100000001
41248852007
4701800058800000001
41248860006
4701800057900000001
41248852008
4701800051000000001
41248832012
4701800057000000001
41248844008
4701800057800000001
41248852009
4701800078600000001
187040
41248505000
4701800059500000001
41248864007
4701800059700000001
41248864008
4701800053400000001
188080
41248830015
4701800000900000001
41248804001
75-110
4701800001000000002
4701800053800000001
41248830018
4701800058900000001
41248860007
4701800001500000001
41248860001
4701800058000000001
41248852011
4701800001200000001
41248848001
1-12,14-100
4701700100000620001
4701700100000620002
187556
(1-17),(10-50)
1900000100001410001
(19-999),(52-998)
1900000100001410002
1900000100000720004
1900000100001450001
1900000100001450002
1900000100003350001
1900000100003350002
5903200032400010001
619562
5981
57121944000
5903200032400020001
5903200032400030001
1-12,13,15,17,19
5903200032400040001
5903200032400050001
5903200032500010001
619543
5903200032500020001
5903200032500030001
5903200032500040001
5903200032500050001
5903200032500060001
25,28
5903200032500070001
5903200032500080001
5900000100016050001
614018
(75-999),(42-998)
6600000100000370003
7200000100001430004
7800000000005830001
7800000000005830002
7800000000007820005
(48-50)
7800000000007840012
(2-998),(1-27),(33-999)
5400000100005940001
5400000100005940002
5400000100016970001
(18-32)
5400000100016970002
5400000100016980001
5400000100016980002
5400000100017660001
5800000100003890001
2,4,6,9-99
5800000100003890002
7601600100000220001
152300
78417000000
7601600100000220002
7601600100000220003
7601600100000220004
7601600100000220005
58,60,62,64,66,68,70,72,74,76,78,80
7601600100000220006
81,83,85,87,89,91,93,95,97,99,101,103
7601600100000220007
152303
105,107,109,111,113,115,117,119
7601600100000220008
121,123,125,127
7601600100000220009
82,84,86,88,90,92,94,96,98,100,102
7601600100000220010
104,106,108,110,112,114,116,118
7601600100000220011
120,122,124,126
7601600100000220012
3,5,7,11,13,17,19,25,27,29
7601600100000010001
2,4,6,10,12,16,18,20,22,24,26,28,30
7601600100000010002
1-58,59,61,63,65
7601600100000320001
67-89
7601600100000320002
7601600100000510001
57-68
7601600100000510002
6100001200010030001
346525
6100001200010120001
6102900002400050001
6125
60241805004
(49-79),(72-90)
6400000100007140008
(81-95),(92-104)
6400000100007140009
(111-133),(94-104)
6400000100015910010
(135-147),(106-116)
6400000100015910011
6400000100014110010
1802200000100500005
1802200000100330003
(42-54)
1802200000100330004
1802200000100700003
1-1000
5001100003000000001
46221852011
5001100020800000001
46221834002
5001100024100000001
46221873001
5001100011200000001
46221819009
5001100003800000001
46221834017
5001100027100000001
46221873006
5001100005200000001
46221852002
5001100012700000001
46221858008
5001100015000000001
46221834018
5001100027000000001
46221873002
5001100002000000001
46221873003
5001100006400000001
46221829003
5001100021600000001
46221837003
5001100004000000001
46221852009
5001100005000000001
141662
46221813005
5001100025700000001
114165
46221837012
5001100002900000001
46221813003
5001100007300000001
46221825002
5001100014400000001
46221870009
5001100012300000001
46221822007
5001100003400000001
46221834019
5001100012900000001
46221852006
5001100015900000001
46221843009
5001100010600000001
46221846017
5001100024000000001
46221870014
5001100018400000001
46221810006
5001100021800000001
46221834013
5001100006700000001
46221810013
5001100019500000001
46221870004
5001100017300000001
46221834006
5001100016200000001
46221810020
5001100000800000001
46221846006
5001100009700000001
46221858009
5001100001200000001
46221810015
5001100017900000001
5002600016400040001
142102
46246825000
(4-68)
3800000300006670001
3800000300006670002
3800000300006670003
664080
3800000300006670004
11,11áâà2,13
7700000000000760109
7700000000002570035
26áâà2,26áâà16,26áâà17
7700000000003640033
26áâà3,28áâà4,28áâà5,28ª1,28ª2,28ª3,28
7700000000004000020
7700000000004320046
148ª1áâà2,148ª2,148ª2áâà2,148ª3,148,150
7700000000004960155
62áâà5,62áâà13
7700000000005210014
73/68áâà4,73/68áâà5,73/68áâà6
7700000000005330031
41áâà14,41áâà17,41áâà20,41áâà21
7700000000009480040
9áâà8,9
7700000000011480009
25áâà13,25áâà14,25áâà15,25áâà16,25áâà18
7700000000013290018
33áâà17,33áâà19,33áâà23
7700000000014000021
20áâà10,20áâà11,20áâà21
7700000000017070008
43áâà10,43áâà13,43áâà14,43áâà15
7700000000017310006
7700000000020250015
27áâà1,27,33
7700000000020270018
8áâà1,8áâà2,8áâà3,8áâà4,8,10áâà1
7700000000021130037
10áâà2,10áâà3,10áâà13
7700000000021130038
49ª8áâà13,49ª15,51,51áâà1,51áâà2
7700000000022160020
56áâà6
7700000000024120013
14áâà9,14áâà10,14áâà11,14áâà13
7700000000024550005
14áâà14,14áâà15,14,16,16ª1,16ª1áâà1
7700000000024550006
16ª2,16ª2áâà1
7700000000024550007
14áâà12
7700000000024550008
14áâà9,14áâà10
7700000000025840005
7700000000034320010
2áâà1,17áâà3,17áâà5,19áâà11
7700000000071760066
28áâà19,28áâà20
7700000000071760067
0300000100000690001
670013
0323
81401368000
1ª1,1ª2,3,3áâà2,3ª1,3ª2
7700000000074150001
áâà10,6,8
7700000000074160001
6900600005000000001
28210804006
6900600015900000001
28210804037
6900600019800000001
28210804040
6900600008900000001
6900600027100000001
28210000000
144 
2400000100000710008
11,12
2400000100004720001
2404800100000020001
647000
2469
8401
04121000000
2404800100000270001
2404800100000060001
647002
3,5,7,8,10
2404800100000060002
2404800100000280001
2404800100000080001
19,21,23
2404800100000080002
647005
2404800100000290001
2404800100000300001
18/1,18/2,20/1,20/2
2404800100000140001
2404800100000320001
2404800100000310001
(2-30),50,52,(60-64)
2400000100000320001
660036
(1-27),51
2400000100000320002
(1-9),13,17,19
2400000100010190001
2400000100010190002
(1-57),(61-71)
2400000100000420001
2400000100000420002
(1-3),7,9,15
2400000100000600001
2400000100000600002
2,3,6,16,19,25
2400000100010390001
(3-7),4
2400000100009360001
660011
5003700002000000001
46256804033
7800000000007840013
3800000300001080004
19 ,21,(30-56)
7600000100004560005
7600000100008000001
7600000100008000002
7601000036500000001
7601000036500020001
7601000036500030001
7601000036500040001
7601000036500050001
7601000036500060001
(2-160)
7601600100000050001
7601600100000050002
152302
4301000100000240001
612410
4309
33214501000
39-58,80-89
4301000100000240002
612412
(2-104),(1-93)
4301000100000660001
(112-134),(95-121)
4301000100000660002
4301000100000700001
4301000100000700002
(2-106),(1-109)
4301000100000750001
(112-148),(111-147)
4301000100000750002
0700500000300000001
361026
0716
83225000004
0700500000200000001
361104
83225000003
0700500000400000001
361027
83225000005
0700500000500000001
361012
83225000006
0700500000600000001
361013
83225000007
0700500000700000001
83225000008
0700500000800000001
83225000009
0700500000900000001
83225000010
0700500001000000001
83225000011
0700500001100000001
361015
83225000012
0700500001200000001
83225000013
1-1500
0700500001300000001
361022
83225000014
0700500001400000001
361024
83225000015
0700500001500000001
83225000016
0700500001600000001
361025
83225000017
0700500001700000001
0700500001800000001
83225000018
0700500001900000001
361016
83225000019
0700500002000000001
83225000020
0700500002100000001
83225000021
0700500002200000001
83225000022
0700500002300000001
83225000023
0700500002400000001
361017
83225000024
0700500002500000001
83225000025
0700500004300000001
0700500002600000001
83225000026
0700500002700000001
361014
83225000027
0700500002800000001
83225000028
0700500002900000001
83225000029
0700500003000000001
83225000030
0700500003100000001
361011
83225000031
0700500003200000001
361010
83225000032
0700500003300000001
361028
83225000033
0700500003400000001
83225000034
0700500003500000001
361023
83225000001
0700500003600000001
361033
83225000035
0700500003700000001
83225000036
0700500003800000001
83225000037
0700500003900000001
361009
83225000038
0700500004100000001
361021
83225000040
0700500004200000001
361020
83225000041
6002500012400000001
180551
6037
58249854001
6002500007200000001
180552
58249854013
6002500017300000001
180560
58249876001
6400000500000410002
2700000100014410001
2700000100014410002
56 ,56¡,65 
2700000100000280006
154,154 ,154¡,154¢,154£,188
2700000100001550001
2700000100001660001
32,32 
2700000100001840004
2700000100014580001
2700000100003030001
2700000100003120001
2700000100021030001
2-96
2700000100008220001
98-106
2700000100008220002
2700000100008080002
2700000100007170001
2700000100007170002
6,12,16¢
2700000100018030001
16,56
2700000100000010005
2700000100000960001
207,215
2700000100011310005
2700000100007550001
(1-73),(77-93),(4-94)
2700000100005890001
1,2,2,2,3,5,5,6
2700000100007290001
2700000100012180001
1,3,5 ,5
2700000100000090001
2700000100001380003
1,1 ,7
2700000100001390001
(5-18)
2700000100001420002
12,33,41
2700000100005680001
43-64
2700000100010270001
151
6900000600001610005
(21-39),(43-81)
5500000100012610005
(93-999),(148-158)
3600000100006490003
2,(1-17)
3601100100000190001
397600
3610
20215501000
(4-52),(19-131)
3601100100000190002
397602
3601100100000390001
(29-139),(38-138)
3601100100000390002
(1-139),(4-110)
3601100100000690001
3601100100000690002
(57-115),(82-124)
3601100100000620001
3601100100000620002
(5-109),(28-126)
3601100100001080001
3601100100001080002
(10-40),(25-49)
3601100100001360001
397601
3601100100001360002
(71-275),(84-230)
3601100100001280001
3601100100001280002
3601100100001290001
3601100100001290002
(39-219),(8-164)
3601100100001370001
(1-37),(2-6)
3601100100001370002
3600600100000150001
3600600100000150002
7501900100000970001
673002
7501900100000970002
673008
1-103
7501900100000580001
104-999
7501900100000580002
(2-62),(1-65)
2401600002800070001
663812
2415
04218825001
(2-18),(1-11)
2401600002800030001
2401600002800050001
(2-54),(1-59)
2401600002800010001
2401600002800090001
(2-80),84,88,92,96,98,100,102,104,106
2401600002800060001
2401600002800060002
2401600002800020001
2401600002800100001
2401600002800040001
2402900000100010001
663850
2428
04239551000
(2-14),(1-3)
2402900000100020001
(2-6),(1-3)
2402900000100030001
(2-4),(8-30),(34-50),(56-62)
2402900000100250001
(66-82),(92-110),(114-136),(142-150)
2402900000100250002
(154-166),(170-192),196,198,(202-246)
2402900000100250003
250,(256-260),264,266,(270-274),278
2402900000100250004
(286-310),(314-320),(324-336)
2402900000100250005
(340-356),(360-408)
2402900000100250006
(1-15),(29-37),(39-47),55,(59-89)
2402900000100250007
(93-107),111,113,(119-153),(157-163)
2402900000100250008
169,(173-187),193,(197-205),(209-215)
2402900000100250009
(219-235),(239-251),255,(261-285)
2402900000100250010
57 ,287 
2402900000100250012
2402900000100380001
2402900000100300001
2402900000100410001
(2-8),(16-66),(74-84),(88-122)
2402900000100310001
(1-21),25,(29-63),(67-69)
2402900000100310003
2402900000100750001
(2-26),(30-34),(44-52)
2402900000100200001
(1-33),(41-55),67,71,77,79,81,83
2402900000100200003
2402900000100530001
2402900000100160001
(4-54),(58-112)
2402900000100120001
(23-89),(99-107)
2402900000100120002
1,3,9,11,15,17,93,95
2402900000100120003
(2-54),(1-49),(53-71)
2402900000100400001
(4-8),12,(5-15),19
2402900000100280001
(2-10),(18-22),(3-9)
2402900000100430001
4,8,10 
2402900000100040001
2402900000100040002
(2-20),(5-13),(17-21),25,27
2402900000100060001
2402900000100070001
2402900000100110001
1-19,(21-39)
2401400000900010001
662826
2413
04216814001
1-3,7
2401400000900120001
2401400000900030001
2401400000900040001
2401400000900100001
2401400000900050001
2401400000900080001
1-4,6-15
2401400000900090001
2401400000900070001
2401400000900060001
2401400000900130001
2401400001700160001
662830
04216828001
2401400001700120001
2401400001700070001
2401400001700090001
2401400001700040001
2401400001700050001
2401400001700110001
2401400001700130001
2401400001700010001
2401400001700150001
2401400001700060001
2401400001700030001
2401400001700080001
2401400001700020001
2401400001700100001
2401400001700140001
2401400001700180001
2401400001700200001
2401400001700170001
2401400001700190001
2401400003000020001
662842
04216804002
2401400003000030001
2401400003000040001
2401400003000010001
2401400000500010001
04216804001
(2-134),(1-133)
2401400000500060001
2401400000500220001
(2-96),(1-97)
2401400000500040001
2401400000500090001
2401400000500020001
2401400000500080001
2401400000500160001
2401400000500200001
2401400000500230001
2401400000500170001
2401400000500050001
2401400000500190001
2401400000500120001
2401400000500030001
2401400000500180001
2401400000500150001
2401400000600020001
662832
04216807001
(2-70),(1-69)
2401400000600090001
2401400000600100001
2401400000600060001
(4-12),(3-13)
2401400000600120001
2401400000600110001
2401400000600070001
2401400000600050001
2401400000600040001
2401400000600140001
2401400000600130001
2401400000600160001
2401400000600170001
2401400002900010001
04216807002
2401400002900030001
2401400002900020001
1-91,2-92
2400000800000250001
93-115
2400000800000250002
(107-133),(96-118)
2400000800000590003
(18-76),(21-63)
2400000800001350001
(1-11),4,8,10
2400000800001350002
(4-32),(1-47)
2400000800001700001
2400000800001700002
2400000800000380003
(1-34),(2-44)
2400000800001780001
2400000800001780002
2400000800000780003
43,44,45,46,47
2400000800001180003
47 ,49,50,51,52
2400000800001180004
(55-57),59,61,63,65
2400000800001240003
67,68,69,69 ,70
2400000800001240004
70 ,70¡,70¢,71
2400000800001240005
71 ,72,72 ,72¡,72¢,73,73 ,73¡
2400000800001240006
74,74 ,74¡,75,76,77,78,84,2
2400000800001240007
2400000800001200001
1-15,17-999
2400000800001200002
2400001700000270001
2400001700000740001
2400001700003120001
(1-999),(2-999)
2400001700000930001
2400001700003420001
2400001700003430001
2400001700001370001
2400001700001430001
2400001700001440001
2400000100003140001
2400000100006560001
2400000100002840001
2400000100001200001
2400000100004600001
2400000100001690001
2400000100004240001
2400000100007370001
2400000100000340001
2400000100000360001
2400000100003050001
2400000100007230001
2400000100003540001
2400000100005430001
2400000100006820001
2400000100005320001
2400000100000060001
37,42
2404800100000160001
2404800100000170001
2404800100000330001
2404800100000220001
2404800100000340001
37/2,39/1
2404800100000240001
2402800001100060001
04237807001
(2-14),(1-29),33,33
2402800001100080001
(2-42),(1-31)
2402800001100050001
(4-20),(3-11),15
2402800001100090001
(2-8),10,14,16,(1-5)
2402800001100120001
4,6,10,12,18,20
2402800001100010001
2402800001100010002
2402800001100140001
2,4,(7-15),19,21
2402800001100130001
(10-18),24,26,28,34,36
2402800001100130002
(2-28),34,(1-3)
2402800001100110001
1,2,(5-13),(17-23),(27-35)
2402800001100030001
(10-18),20,22,26
2402800001100030002
(2-16),1,3,5,(17-31)
2402800001100020001
(2-12),18,22,(3-9)
2402800001100070001
(26-34),(13-37)
2402800001100070002
2,4,(12-20),(3-19),(23-33)
2402800001100040001
(1-7),11
2400000100001110001
(4-18),22
2400000100001110002
2400000100010210001
(2-28),(34-42)
2400000100000970001
2400000100000940001
2400000100000940002
2400000100000890001
(4-46),50,(56-76)
2400000100000890002
1,65
2400000100000850001
(4-16),(24-46),50,(56-76)
2400000100000850002
2400000100000860001
2400000100000860002
(1-7),17
2400000100000870001
2400000100000870002
2400000100000880001
6,8,50,(56-76)
2400000100000880002
(1-99),(2-86)
2400000800000590004
4303100013400000001
610902
33235852013
4303100014600000001
33235852017
4303100001000000001
33235852004
4303100001100000001
33235852003
4303100011900000001
33235852012
4303100020100000001
33235852023
4303100020600000001
33235852025
4303100001500000001
613101
33235804015
4303100006600000001
33235804018
4303100021000000001
33235804021
4303100004500000001
613103
33235804003
4303100009100000001
33235804006
4303100012800000001
613106
33235816004
4303100020900000001
33235816007
4303100019100000001
33235816006
4303100100400000001
613153
33413000003
4303100100500000001
33413000004
4303100100200000001
33413000002
4303100010900000001
33235832014
4303100014200000001
33235832020
4303100024500000001
33235832025
4303100025900000001
613108
33235816008
4303100026400000001
33235816012
4303100003200000001
33235816010
4303100025700000001
33235816015
4303100017000000001
33235816011
4303100016400000001
613109
33235852019
4303100019600000001
33235802024
4303100000800000001
33235832004
4303100002400000001
33235832006
4303100012000000001
33235832015
4303100016200000001
33235832021
4303100023700000001
33235832024
4303100000200000001
33235832002
4303100026100000001
33235832008
4303100004600000001
33235832009
4303100005500000001
33235832012
4303100012900000001
33235832017
4303100013600000001
33235832019
4303100017700000001
33235553002
4303100026600000001
33235832001
4303100004700000001
33235832011
4303100007300000001
33235856007
4303100007400000001
33235856006
4303100020700000001
33235856013
4303100006000000001
33235856005
4303100001300000001
613115
33235832003
4303100003000000001
33235832005
4303100000700000001
33235852002
4303100002600000001
33235832007
4303100008200000001
33235832013
4303100013200000001
33235832018
4303100014500000001
33235852015
4303100015100000001
33235852016
4303100022400000001
33235832023
4303100002500000001
613117
33235802005
4303100004800000001
33235802026
4303100005100000001
33235802007
4303100006700000001
33235802010
4303100008700000001
33235802014
4303100008900000001
33235802016
4303100010000000001
33235802013
4303100013100000001
33235802019
4303100013800000001
33235802018
4303100017400000001
33235802028
4303100020300000001
33235802022
4303100025400000001
33235802030
4303100003700000001
33235802003
4303100010100000001
33235802012
4303100011000000001
33235802015
4303100013000000001
33235802020
4303100015300000001
33235802021
4303100019700000001
33235802023
4303100021900000001
33235802027
4303100017600000001
613118
33235852021
4303100021800000001
33235852026
4303100022300000001
33235852029
4303100023200000001
33235852030
4303100025200000001
33235852001
4303100003100000001
33235852005
4303100004400000001
33235852006
4303100005400000001
33235852007
4303100009800000001
33235852010
4303100010600000001
33235852011
4303100014300000001
33235852014
4303100014800000001
33235852018
4303100027300000001
33235852022
4303100020200000001
33235852024
4303100025300000001
33235852031
4303100004000000001
613120
33235824002
4303100015600000001
33235824009
4303100020500000001
33235824012
4303100023800000001
33235824013
4303100014700000001
613121
33235846012
4303100016500000001
33235846018
4303100017500000001
33235846019
4303100023300000001
33235846016
4303100000600000001
33235846002
4303100003400000001
33235846005
4303100003500000001
33235846004
4303100004300000001
33235846006
4303100007500000001
33235846008
4303100009300000001
33235846010
4303100010200000001
33235846009
4303100015900000001
33235846017
4303100016900000001
33235846013
4303100019800000001
33235846001
4303100010500000001
33235846011
4303100011100000001
613123
33235812011
4303100025800000001
33235812014
4303100001200000001
33235812002
4303100021500000001
33235812004
4303100024700000001
33235812006
4303100025100000001
33235812005
4303100005000000001
613125
33235812008
4303100008800000001
33235812010
4303100012400000001
33235812012
4303100006900000001
613130
33235860005
4303100009500000001
33235860007
4303100023600000001
33235860027
4303100000300000001
33235860002
4303100002000000001
33235860003
4303100008100000001
33235860008
4303100009000000001
33235860012
4303100009200000001
33235860006
4303100009400000001
33235860010
4303100009900000001
33235860011
4303100012100000001
33235860013
4303100014100000001
33235860015
4303100017200000001
33235860020
4303100018000000001
33235860018
4303100018300000001
33235860017
4303100018400000001
33235860019
4303100020400000001
33235860022
4303100022800000001
33235860025
4303100024300000001
33235860026
4303100011300000001
33235860014
4303100001600000001
613133
33235828004
4303100003300000001
33235828003
4303100004200000001
33235828005
4303100007900000001
33235828006
4303100011400000001
33235828009
4303100013900000001
33235828010
4303100014400000001
33235828011
4303100019900000001
33235828017
4303100021300000001
33235828016
4303100023000000001
33235828018
4303100024100000001
33235828021
4303100024200000001
33235828020
4303100024400000001
33235828019
4303100006300000001
613137
33235804005
4303100008500000001
33235804007
4303100001900000001
33235804002
4303100015200000001
33235804009
4303100020800000001
33235804013
4303100021400000001
33235804011
4303100021700000001
33235804014
4303100010800000001
33235860009
4303100018100000001
613142
33235836007
4303100018600000001
33235836008
4303100019200000001
33235836009
4303100005600000001
613145
33235836003
4303100016100000001
33235820009
4303100025600000001
33235836014
4303100003900000001
33235836002
4303100006200000001
33235820005
4303100009700000001
33235820006
4303100016600000001
33235820011
4303100022700000001
33235836011
4303100016000000001
33235820010
4303100008000000001
33235820008
4303100001800000001
33235816009
4303100004900000001
33235856004
4303100014900040001
4303100014900000001
4303100000900000001
33235856002
4303100026500000001
33235856012
4303100025500000001
33235856017
4303100024600000001
33235832026
4303100022100000001
33235852028
35áâà2,35áâà3,35áâà4,37áâà1,37áâà2
7700000000000010020
57áâà12
7700000000001630064
21/9,21,22,24/7,35
7700000000002280034
13áâà4,14,15/16,15,15,16,18,20
7700000000003300125
20áâà1,20,20,20,22/18,22/18áâà1
7700000000003300126
24/43,26
7700000000003300127
10ª4áâà1,10,10,10,10áâà1,12,12áâà1
7700000000004510008
142ª2,142ª2áâà1,142,142,144ª1,144ª2
7700000000004760261
7700000000005690011
27,33,35,37
7700000000007900003
33ª1áâà1,33ª1áâà2,33ª2,35,36áâà1
7700000000009650019
58áâà34,58áâà35,58áâà36,58áâà41
7700000000016860075
11/2áâà5,11/2áâà6
7700000000017630029
9áâà4
7700000000017640011
119áâà74,119áâà75,119áâà234,119áâà252
7700000000018560097
119áâà307,119áâà308,119áâà313
7700000000018560207
119áâà314,119áâà315,119áâà316
7700000000018560208
102áâà23,102áâà24,102áâà25,102áâà26
7700000000018560223
102áâà27,102áâà29,102áâà29,102áâà30
7700000000018560224
7700000000018570027
16áâà20,17,17áâà2,21,23ª1,23ª1áâà1,24
7700000000019240006
25,26,26áâà1,26,27áâà1,27áâà2,27áâà3
7700000000019240007
7700000000019240008
27áâà18,28áâà1,28áâà4,28áâà6
7700000000019240009
22áâà2,22áâà3
7700000000020740005
7700000000021200006
13áâà21
7700000000022100002
7700000000022760005
7700000000024830036
12/18
7700000000025040003
68áâà4,68áâà5,68áâà6,72áâà1,74,74áâà2
7700000000025120059
10áâà11,10áâà12,10áâà1,11ª,11ª
7700000000028450011
11áâà25,11áâà26,11áâà51,11áâà52
7700000000028450012
7700000000028470002
37áâà2,39
7700000000028600029
7700000000028740003
7700000000028790009
46áâà2,52áâà3,54,54áâà2,54áâà3
7700000000028800003
52,56/6,58/5
7700000000028810006
26/8áâà2,27,29/30áâà3,33_39
7700000000028820005
37áâà2,37/6,37/6áâà2
7700000000029340010
1,3
7700000000029440001
23,25,25áâà1
7700000000029530003
13áâà20,13ª1,13,14,15ª1,15ª2,16,17,18
7700000000029590006
18áâà1,19,20,21,21áâà1
7700000000029590007
1,3,5,7,7ª1,7ª1áâà1,9,11,13,15,15áâà1
7700000000030280013
15ª1,17
7700000000030280014
9áâà10,9ª1,9ª2,9áâà1
7700000000030450008
3áâà102,3áâà2,3áâà1,4,4áâà1,5,5áâà3
7700000000030460011
16áâà1,18áâà1,18áâà3,18áâà4
7700000000030520008
15áâà5,18ª1,18ª2,19ª1,19ª2,20,22,27
7700000000030560014
27áâà9,29,29áâà2,29áâà3,29áâà4,29áâà6
7700000000030560015
31áâà8,31áâà10,31áâà10,31áâà16
7700000000030560018
48ª3áâà1,48,48,48
7700000000031030060
47áâà2,49/9
7700000000031200008
35áâà2,35áâà4,35áâà5
7700000000031240006
7700000000031550001
105áâà1,114áâà1,116,120,120áâà1
7700000000032000024
7áâà1,7,8,10,12,14,16,16áâà1
7700000000032010004
24áâà2,27,27áâà2,28
7700000000032160003
122,122,123,123,124,124áâà1,124áâà2
7700000000032210032
142ª3,142,143,144,144áâà2,147,158
7700000000032210047
2áâà12,2áâà13,4,6,8áâà1,8áâà2,8áâà1
7700000000032250008
47,47áâà3
7700000000032990009
7700000000033400002
11áâà2,13,14
7700000000034040005
7ª,8ª831,8ª832,8ª832áâà2,8ª833,8ª834
7700000000034970011
7700000000035970003
7700000000035980001
7700000000036120002
11áâà11,11áâà12,11áâà13,17
7700000000036120003
16áâà3,16áâà4
7700000000036720014
12áâà4,12áâà5,12áâà6,12áâà7,18
7700000000036730015
7áâà5,7áâà7
7700000000037080003
1ª2áâà6,4,6,6áâà1,7,7áâà2,7áâà3
7700000000037200001
5áâà2,5áâà3,5áâà4,5áâà1,7,9áâà1
7700000000037650002
5áâà13,5áâà14
7700000000038000003
30áâà23,30áâà24,30áâà29,34,34áâà1
7700000000038010041
1,2,3,5,6,7,8,9,10,11,12
7700000000038960001
2áâà21,2áâà22,3
7700000000039810006
46áâà16,46áâà17,46áâà18,46áâà19
7700000000041500011
7700000000041500012
46áâà24,46áâà25,50,50áâà1,50áâà2
7700000000041500013
7700000000041510005
2áâà1,7áâà1,7áâà2,7áâà3
7700000000041630001
42áâà9,42áâà10
7700000000041730009
2,2áâà1,2áâà3,2áâà4,2áâà6,2áâà7,2áâà13
7700000000042100001
7700000000042100002
4áâà7,4áâà8,11áâà1,11áâà2,11áâà3
7700000000042100003
11áâà4,11áâà5
7700000000042100004
1,1áâà1,1áâà2,1áâà3,1ª1,1áâà1
7700000000042200001
ª10,10áâà1
7700000000042910002
24,24áâà1,24áâà2,24áâà3,24áâà4,24áâà6
7700000000043020001
9áâà13,9áâà14,11,13
7700000000043030004
7700000000043250001
27,27
7700000000043470010
27áâà6
7700000000044990002
3ª6,3ª7,4ª1,4ª1áâà1,4ª2
7700000000045130002
15/51,17áâà1,17áâà2,17ª1,17ª2,19ª1
7700000000045420010
19ª2,21áâà1,21áâà2,21ª1,21ª2
7700000000045420011
6ª3áâà2,6ª4,6ª5,8
7700000000070160003
9áâà2,9áâà4
7700000000070290003
74ª3,74ª3áâà1,76,76áâà1,76ª2,78ª2,79,81
7700000000070550039
134,134áâà1,136,136áâà1,138,138
7700000000070750045
29áâà1,30,31áâà1,31áâà2,31áâà3,32,34
7700000000070760021
36,36
7700000000070760022
7700000000070840004
7700000000071450001
24,25,26áâà1,26áâà2,26,26,27,29,30
7700000000071530007
31,32,34,36
7700000000071530008
7700000000071770008
16áâà9
7700000000071830005
33,33,35,35áâà4,35ª2,35/30áâà1
7700000000072000019
40/2áâà2,40/2áâà3,40/2áâà4
7700000000072090023
11áâà1,11áâà2,11áâà3
7700000000073020002
1áâà78
7700000000073050020
7700000000073360001
23áâà1,23ª1
7700000000073470004
7700000000073540003
9,12áâà1,12áâà2,12áâà3
7700000000073540004
áâà24
7700000000073630005
áâà17
7700000000073660004
áâà14,áâà15,áâà16,áâà17
7700000000073670003
3áâà19,3áâà20,3áâà23,3áâà25
7700000000073680004
1áâà3,2áâà1
7700000000073700002
2áâà1,10áâà1,12áâà1,14áâà1,14áâà2
7700000000073740002
22ª1áâà1,22ª2,22ª2áâà1,22ª2áâà2,22ª3
7700000000073920006
24,24áâà1,24ª1,26,26ª1,26ª2,26ª3,26ª4
7700000000073920007
28,28ª1,30,30ª1,30ª2,32,32ª1
7700000000073920008
7700000000074140001
7700000000074210001
27áâà1
7700000003330740005
7700000003331070008
7700000003339060003
77,79,81,81áâà13,83
7700000003342010009
34áâà4,36áâà2,37,38/16,39,40,40áâà2
7700000003730010013
ª429,ª430,ª430áâà1,ª431,ª431áâà1
7700000200000000159
ª431,ª432,ª433,ª433áâà1,ª435,ª435
7700000200000000160
ª436,ª438,ª438,ª439,ª440,ª440áâà1
7700000200000000161
ª441,ª442,ª442áâà1,ª442,ª445,ª445áâà1
7700000200000000162
ª841,ª841áâà1,ª842,ª842áâà1,ª843
7700000200000000163
ª501,ª504,ª505,ª506,ª507,ª508,ª509
7700000200000000188
ª510,ª511,ª512,ª513,ª517
7700000200000000189
ª1004áâà1,ª1004,ª1004,ª1005
7700000200000000190
ª1005áâà3,ª1005,ª1005,ª1006
7700000200000000191
ª1006áâà1,ª1006,ª1006áâà2,ª1006
7700000200000000192
ª1802áâà1,ª1803,ª1804,ª1804
7700000200000000197
ª1804áâà1,ª1804,ª1805,ª1806,ª1807
7700000200000000198
ª1807áâà1,ª1807,ª1808,ª1809,ª1810
7700000200000000199
ª1811,ª1812,ª1813,ª1814,ª1815,ª1816
7700000200000000200
ª1817,ª1818,ª1819,ª1820,ª1821,ª1822
7700000200000000201
ª1823,ª1824,ª1824áâà1,ª1825,ª1924
7700000200000000202
ª1925,ª1925
7700000200000000203
7700000200013090021
11áâà23,11áâà1,11áâà2,11áâà3,11áâà4
7700000200013090022
6áâà1,10
7700000200016210002
1áâà1,4áâà1
7700000200019070001
7700000200022050014
7700000200027290005
7700000200027290006
7700000200027290007
7700000200027290008
6áâà24,6áâà25,6áâà26,6áâà27,6áâà1
7700000200027290009
6áâà2,7,8,8áâà1,8áâà2,8áâà3,9,9áâà1
7700000200027290010
9áâà2,10áâà1,10áâà2,10áâà3,11áâà1
7700000200027290011
7700000200027290012
12áâà1,12áâà2,12áâà3,12áâà8,12áâà9
7700000200027290013
12áâà10,12áâà11,15,17áâà1,17áâà2
7700000200027290014
1,3,4,5,6áâà,7,8,9,10,11,12,13,14,15
7700000200045460001
7700000200045460002
29,30,31,32,33,33áâà2
7700000200045460003
34,35,36,38,39,40,41,42
7700000200045460004
7700000200045460005
117,119,124
7700000200600000003
1-15,38-47
3600000400000010001
394045
20213000000
(81-91)
3400000100007540004
(44-52)
3400000100007420001
68,70,72
3403000100000160002
3403000100001370001
(2-18),(1-29)
3403000100000440001
3403000100000340001
3403000100000490001
3403000100000100002
3403000100001370002
(31-999),(32-999)
3403000100000370002
(31-999),(20-999)
3403000100000440002
(25-999),(32-999)
3403000100000490002
3403000100000220002
3403000100000420001
(13-17),(14-18)
3403000100000340002
(1-15),(2-16),(33-43),(34-44)
3403000100000710002
(53-999),(50-999)
3403000100001000002
3403000100000340003
3401400100000020001
3401400100000020002
404352
5,10,17
3401400100000020003
3400000100028770001
1,1,3
3400000100000210001
3400000100006520002
3400000100009410002
98áâà1,98áâà2,98áâà3,98áâà4
7700000002800000014
98áâà5,98áâà6,98áâà7,98áâà8
7700000002800000015
98áâà9,98áâà10,98áâà11,98áâà12
7700000002800000016
98áâà13,98áâà14,98áâà15,98áâà16
7700000002800000017
98áâà18,98áâà19,98áâà20,107áâà1,111
7700000002800000018
72/1,(74-254),(75-255)
6400001000000180004
6400001000000480003
6400001000000040001
6400001000000040002
6400001000000080001
6400001000000080002
(2-36),(1-35),38
6400001000000120001
38/1,38/2,(40-100),(37-101)
6400001000000120002
6400001000000520001
(68-200),(51-201)
6400001000000520002
1/2,1/3
6400001000000950003
413727
6400000100006480007
(37-113),(18-104)
6400000100051750001
410086
(1-33),(4-6),14
6400000100051750002
(1-3),(7-9),(43-45),44
6400000100050740001
(2-6),(14-16)
6400000100004230001
6400000100004230002
6400000100004910001
6400000100004910002
6400000103500250001
410507
1-17,18,32
6400000100009540001
4/6,6/2,18,19,20,21,22,24,25,29
6400000100009540002
(3-5),2,(4-18)
6400000100010080001
(7-11),13,15/8,(20-44)
6400000100010080002
6400000100010150002
6400000100010710001
(19-41),(20-42)
6400000100010710002
(19-41),(10-20)
6400000100010750002
29,29,31/1,31/3
6400000100012680003
(11-83),(8-78)
6400000100008240008
(85-107),(80-82)
6400000100008240001
6400000100001480001
(35-111)
6400000100001480018
6400000100001480019
6400000100007140010
(6-28),(3-81)
2300000100007570001
2300000105000000001
2300000105100000001
2300000105400000001
2300000105300000001
2300000104900000001
2300000105500000001
2300000105600000001
2300000106300000001
2300000106400000001
2300000105700000001
2300000106500000001
2300000105200000001
2300000106000000001
2300000105800000001
2300000106700000001
2300000106200000001
2300000106600000001
2300000106100000001
2300000105900000001
(2-998),(1-39)
2300000100000220001
2300000100000220002
2300000100000510001
(38-998),(37-999)
2300000100000510002
2300000100002290001
(12-998),(21-999)
2300000100002290002
(2-20),(1-57)
2300000100002490001
2300000100002490002
2300000100004550001
2300000106800000001
2300000106900000001
2300000107000000001
2300000107100000001
2300000107200000001
95-127
2300000700003160004
2300000700003160005
354019
2300600100000050001
352601
2368
03406000000
1-4,41-43
2300600100000050002
352631
2300600100000050003
352630
2300600100000060001
352635
9,11-28
2300600100000060002
352632
1-79,81,83,85
2300600100000080001
80,82,84,86-272
2300600100000080002
352633
1-46,48
2300600100000730001
47,49-72
2300600100000730002
2300600100000130001
3,5,7,9,11,13,15,17
2300600100000130002
2300600100000130003
2300600100000140001
94-195
2300600100000140002
2300600100000180001
2300600100000180002
2300600100000160001
24-51
2300600100000160002
2300600100000160003
2300600100000240001
95,97,99,101,103,105,107,109,111,113,115
2300600100000240002
352634
117
2300600100000240003
96,98,100,102,104,106,108,110,112,116
2300600100000240004
2300600100000240005
130-156
2300600100000240006
2300600100000250001
111,113
2300600100000250002
2300600100000250003
115-126,128
2300600100000250004
2300600100000250005
352637
2300600100000290001
21,23,25,27,29,31,33,35,37,39,41,43,45
2300600100000290002
2300600100000290003
20,22,24,26,28,30,32,34,36,38,40,42,44
2300600100000290004
46,48,50,52,54-161
2300600100000290005
2300600100002980001
2300600100002980002
1-112,114,116,116/1
2300600100002870001
113,115,117-157
2300600100002870002
2300600100000450001
113,115,116 ,117-225
2300600100000450002
226-254
2300600100000450003
(1-107),(2-24),28
2300600100000340001
153,155,157
2300600100000340002
26,30,34,36,38,40,42,44,112
2300600100000340003
167,169,171,173,175
2300600100000340004
138,140,142,144,146,148,150,152,154,156
2300600100000340005
158,160,162,164,166,168,170,172,174,176
2300600100000340006
178,180,182,184,186,188,190,192,194,196
2300600100000340007
198,200,202,204,206,208,210,212,214,216
2300600100000340008
218,220,222,224,226,228,230,232,234,236
2300600100000340009
237-381
2300600100000340010
211,213,215,217,219,221,223,225,227,229
2300600100000340011
231,233,235
2300600100000340012
(177-209),(109-151),(159-165)
2300600100000340013
(46-136)
2300600100000340014
6/1
2300600100000350001
(1-225),(2-194)
2300600100000350002
(227-415),(196-386)
2300600100000350003
1-69,71,73,75,77,79,81,83,85,87,89,91
2300600100000360001
93/2
2300600100000360002
93,95,(70-82),(84-140),(97-141)
2300600100000360003
2300600100000380001
2300600100000380002
1-6,8-140
2300600100000380003
(1-81),(2-76)
2300600100000440001
(83-315),(78-314)
2300600100000440002
2300600100000500001
(1-41),(2-38),(43-193),(40-144)
2300600100000370001
(195-345),(146-394)
2300600100000370002
(1-43),(2-24)
2300600100000520001
53,(28-66)
2300600100000520002
98,(63-67),(68-84)
2300600100000520003
2300600100000540001
(93-183),(96-184)
2300600100000540002
2300600100000580001
(87-159),(90-160)
2300600100000580002
(167-353),(96-276)
2300600100000620001
125/1,1-95,(105-107),(127-129)
2300600100000620002
(109-123),(131-165),125
2300600100000620003
(1-171),(2-118)
2300600100000670001
(173-285),(120-200)
2300600100000670002
1,3,5,(8-22)
2300600100000690001
2,4,6,(7-23),24-376
2300600100000690002
2300600100000720001
2300600100000720002
(1-69),(2-76)
2300600100000740001
(82-88),90,(75-87),(89-91)
2300600100000740002
(1-181),(2-190)
2300600100000810001
(183-337),(192-336)
2300600100000810002
2300600100000830001
11-221,223
2300600100000830002
(225-319),(222-338)
2300600100000830003
2300600100000930001
17-57
2300600100000930002
(1-9),(2-134)
2300600100001020001
(11-31),(136-144)
2300600100001020002
2300600100001030001
(29-225),(24-222)
2300600100001030002
(13-19),(12-24)
2300600100000980001
(318-426),(357-459),475
2300600100000980002
1-11,(21-101),(26-38),(103-255)
2300600100000980003
(40-226),(257-335),(228-296)
2300600100000980004
(298-316),(337-355),(461-473)
2300600100000980005
(428-478)
2300600100000980006
(15-51),(16-216)
2300600100001080001
1-14,(53-229),(218-226)
2300600100001080002
2300600100001320001
15-26
2300600100001320002
71,45,(2-36),(1-43)
2300600100001270001
(47-69),(38-48)
2300600100001270002
(75-81),(50-54)
2300600100001270003
2300600100001190001
2300600100001190002
(1-7),(2-74)
2300600100001140001
(9-141),(76-186)
2300600100001140002
(51-245),(48-220)
2300600100001210001
2300600100001210002
2300600100001370001
17-66
2300600100001370002
2300600100001300001
13-274,276
2300600100001300002
275,277-328
2300600100001300003
2300600100001260001
2300600100001260002
(36-68),(39-73)
2300600100001260003
75-278
2300600100001260004
2300600100001330001
(201-249),(184-254)
2300600100001330002
(147-199),(136-182)
2300600100001330003
60,62,66,68
2300600100001420001
2300600100001420002
2300600100001420003
(74-94),(139-161)
2300600100001440001
(1-77),(2-42),(79-137),(44-72)
2300600100001440002
2300600100001520001
2300600004900010001
352613
03208813001
(9-77),(12-54)
2300600004900010002
352607
2300600004900020001
2300600004900020002
(1-37),(2-24)
2300600004900100001
(26-48),(39-97)
2300600004900100002
(1-35),(2-98)
2300600004900150001
(37-39)
2300600004900150002
2300600004900190001
(110-202),(111-199)
2300600004900190002
2300600004900270001
(37-99),(56-146)
2300600004900270002
2300600004900280001
(62-136),(69-117)
2300600004900280002
(2-78),(84-998),(1-999)
5900000100007830002
7601000022300050001
1-6,7 ,7,8-11,13-19
7601000036800000001
78226860005
7601000031000090001
7600100071800010001
7600100071800020001
7600100071800030001
17-20
7600100043800050002
133,135,137
7600100019700180006
7600100019700220001
101,102
7600100022800050002
7600100042900010001
1-3,5-8,9 ,9,10-31,33
7600100042900020001
7600100042900030001
46,47 ,47¡,47,48 ,48,49,50 ,50,51-52,53 
7600100006000000002
53¡,53,54 ,54,55-59
7600100006000000003
7600100028100000002
7600100028100010001
1-23,25,27,28,29,30 ,31-35,36 ,36,37,38
7600100045800000001
40-46,48,50-52,54,55,58,60-64,66,67 ,67
7600100045800000002
7600100045800000003
21-24,25 ,25,28
7600100033800070002
2-4,6,8,9-16,19,30
7600100068200000002
7600100002800000002
15,16,17
7600100044400000002
7600100046800030001
186¢,186,187-190
7601000000100410004
7601000000100530001
29-56,68 ,68
7601000000100120002
7601000000100550001
25,26-40
7601000020500000002
31-33
7601000029200000002
7601000028500030002
57,58-67,68 ,68,69-121
7601000017700020002
77,78
7601000026900020002
7601000014600020002
20-29,30¡,30,31-58,78,80,81,84
7601000026700000002
7601000026700000003
7600100014500000001
1-87,89-999
4402400100000030001
4402400100000030002
157550
34248810001
139-999
4402400100001360003
34430000002
7601000021400000001
78226840018
11¯,15¯,17¯,21¯,29¯,31¯
7400000100002160009
7400000900001320001
7400000900001320002
7400000100001140021
7400000100001140022
(2-90),(1-70)
3200000100000270001
71,71 ,73,75,77,79,81,81 
3200000100000270002
(2-84),(13-61)
3200000100001890001
3200000100002390001
3200000100008330001
3300000100000590004
3300000100002230001
3300000100002230002
1600300100000980001
423330
1688
1643
92403000000
20,21,25,27,28,36
1600300100000980002
423331
4,6,10,12,14
1600300100000980003
423332
4-10,12,15-20,24
1600300100000420001
21,31,33,35
1600300100000420002
26-32,34,37-46
1600300100000420003
20-23,27,29
1600300100000850001
1-11,17,18
1600300100000850002
1600300100000090001
1600300100000090002
7200000100003080025
83,85,89,(91-95)
7200000100002150008
3900000100006060001
(84-998),101,103
3900400008300040001
238324
3917
27209813001
11,13,33,35
2400000500000890001
663693
2400900000100070001
663060
2411
2408
04210551000
2400900000100080001
2-4,8-26
2400900000100090001
2400900000100100001
1-26,28-30
2400900000100110001
2,4,6,8-23,25,27-28,32,34-42
2400900000100120000
2400900000100130001
1-15,16
2400900000100140001
2400900000100940001
2400900000100160001
1-175
2400900000100170001
1-37,39
2400900000100180001
1-12,14-45,47,49,51
2400900000100190001
1-22,24,26,28
2400900000100200001
2400900000100210001
2400900000100220001
2400900000100230001
2400900000100240001
2400900000100250001
1,3-25,27
2400900000100260001
1-192
2400900000100270001
2400900000100280001
2,4,6,8,10,12-16,18
2400900000100290001
1-15,17-51
2400900000100300001
1-25,27
2400900000100310001
1-2,4,6,8,10,12,14,16,18
2400900000100320001
1-38,40,42,44
2400900000100330001
1-4,6,8,9-38,40,42,44,46,48
2400900000100340001
2400900000100350001
2400900000100490001
2400900000100360001
2400900000100370001
2400900000100420001
1-6,8,10,12,14,18,20,22,24,26,28,30
2400900000100430001
2,4,6,7-49,51,53,55,57,59,61
2400900000100440001
1-3,5-15
2400900000100450001
1-94,96-108
2400900000100510001
2400900000100530001
1-59,61-72,74,76,78,80,82,84,86
2400900000100540001
2400900000100550001
1,3,5,7,9-12,14-17
2400900000100560001
2400900000100520001
2400900000100580001
2400900000100010001
2400900000100020001
2400900000100030001
2-14,16,18,20
2400900000100040001
1-6,8-22,24-33,35
2400900000100050001
2400900000100060001
2400900000100590001
1-4,6,8,10,12
2400900000100600001
2400900000100610001
1-75,77,79,81
2400900000100630001
2-5,7,9,11,13,15,17,19
2400900000100640001
1-93,95,97,99,101,103,105
2400900000100650001
1-2,4,6,8,10-11,13-22,24,26,28,30,32,34
2400900000100660001
2400900000100670001
1-177/179,181,183,185,187,189,191
2400900000100680001
2400900000100690001
2400900000100700001
2400900000100740001
1,3,5,7,9-10,12-27,29
2400900000100710001
2400900000100720001
2400900000100750001
2400900000100760001
2400900000100770001
1-2,4,6,8,10
2400900000100780001
2400900000100790001
2400900000100810001
2400900000100820001
1-45,47,49,51
2400900000100830001
2400900000100850001
1-7,9,11,13,15,17,19,21
2400900000100860001
2400900000100870001
2400900000100880001
1-23,25,27
2400900000100890001
1-8,10,12,14,16,18
2400900000100900001
2400900000100910001
2400900000100920001
2400900000100930001
1-6,8-9,11-12,14,18,20-44,48
2400900003200040001
663064
04210819001
2400900003200080001
2400900003200060001
2400900003200030001
2400900003200020001
2400900003200010001
1-12,19-77
2400900000500040001
04210819002
2-26,28,30,32
2400900000500010001
2400900000500020001
1-9,11-52
2400900002200010001
04210819003
2400900002200020001
2400900003000010001
663065
04210819005
1-161
2400900003300120001
663062
04210822001
2400900003300090001
2400900003300070001
2400900003300080001
2400900003300060001
1-21,23,25,27,29,31,33
2400900003300110001
2400900003300030001
2400900003300010001
2400900003300020001
2400900003300130001
2400900001800010001
04210822003
1-62,64,66,68
2400900002500020001
04210822002
1,13,15,17
2400900002500030001
1-2,4,9
2400900002500010001
2400900001900010001
04210802002
2400900001900020001
2400900001900030001
2400900000200020001
04210802001
2400900000200010001
2400900000200050001
2400900000200030001
1-62,(65-69)
2400900000700010001
663075
04210807001
1-4,(6-12)
2400900000700090001
2400900000700080001
2400900000700030001
2400900000700070001
2400900000700020001
2400900000700060001
2400900000700040001
2400900000700050001
1-44,(46-80)
2400900001200040001
663071
04210807002
2400900001200020001
2400900001200010001
2400900001200050001
2400900001200030001
2400900001000040001
663069
04210810001
2400900001000010001
1-29,(31-35)
2400900001000060001
2400900001000090001
1-16,19,21,23
2400900001000030001
2400900001000070001
2400900001000050001
2400900000600050001
04210810002
1-14,(16-20)
2400900000600010001
2400900000600020001
2400900000600030001
2400900003100080001
663063
04210828001
2400900003100050001
2400900003100070001
2400900003100040001
2400900003100010001
2400900003100030001
1-35,(37-55)
2400900003100060001
2400900003100090001
2400900002600010001
04210828003
2400900003700010001
04210828002
1-37,39-51,(52-70)
2400900001700040001
663067
04210828004
2,4,14
2400900001700010001
2400900001700030001
(3-31),(2-38)
2400900003900060001
04210828005
1-15,(17-25)
2400900003900090001
1,6,8,10
2400900003900070001
2400900003900050001
2-5,(7-11)
2400900003900080001
2400900003900040001
2400900003900020001
2400900003900030001
2400900001500050001
663072
04210813001
2400900001500010001
2400900001500080001
2400900001500060001
2400900001500040001
2400900001500020001
2400900001500070001
2400900001100010001
04210813002
1-5,(7-11)
2400900001100020001
2400900002300020001
04210813003
2400900002300010001
2400900000900020001
663076
04210816003
2400900000900010001
2400900002400040001
663074
04210816005
2400900002400030001
2400900002400050001
1-37,(40-48)
2400900002400010001
2400900002400020001
(9-51),(2-42)
2400900001600040001
04210816002
2400900001600020001
2400900001600010001
(1-47),(1-62)
2400900001600030001
2400900001600050001
2400900002000060001
663073
04210816001
2400900002000010001
2400900002000040001
2400900002000070001
2400900002000050001
2400900002000020001
2400900002000080001
2400900003600010001
04210816004
(1-61),(16-34)
2400900002900050001
04210555000
2400900002900070001
(1-105),(2-24)
2400900002900100001
2400900002900040001
2-5,10-18
2400900002900170001
2400900002900140001
7-8,(23-57),(12-48)
2400900002900110001
(11-19),6,29,39,41,49,55
2400900002900130001
4-7,13,15,21
2400900002900090001
2400900002900010001
2400900002900030001
2400900002900150001
2400900002900120001
2400900002900020001
2400900002900160001
2400900002900180001
4,8,12,14,20,24-29
2400900003500020001
04210555001
22,27,29,34,36
2400900003500010001
10-12,19,26,28
2400900003500030001
2400900001300010001
04210555003
1,7,8,13,16,29
2400900002800010001
04210555002
2-3,6-13
2403600002200030001
663043
2435
04251802005
2403600002200060001
2403600002200010001
2403600002200020001
2403600000800020001
04251802002
2403600000800060001
2403600000800100001
2403600000800030001
2-6,12
2403600000800130001
2403600000800090001
2403600000800070001
2403600000800140001
2403600000800010001
2403600000800150001
2403600000800170001
2403600000800160001
2403600000200210001
04251802001
2403600000200220001
3-30
2403600000200150001
2-8,(10-14)
2403600000200300001
3-24
2403600000200290001
2,4,6,7
2403600000200180001
2403600000200070001
3-7,(9-13)
2403600000200260001
1-4,(6-12)
2403600000200340001
1,4-7,9,(12-16)
2403600000200230001
2-16,(18-26)
2403600000200190001
2403600000200320001
2403600000200280001
2403600000200080001
2403600000200160001
2403600000200330001
1-6,(10-18)
2403600000200360001
1-13,(15-29)
2403600000200090001
1-67,(69-201)
2403600000200010001
2403600000200200001
2403600000200120001
1-10,(17-23)
2403600000200030001
2403600000200170001
2403600000200060001
1-6,17,19,(8-20)
2403600000200250001
1-49,(51-97)
2403600000200050001
2403600000200140001
1-5,(7-15)
2403600000200370001
2403600000200310001
2403600000200270001
1-51,(53-69)
2403600000200100001
2403600000200040001
2403600000200110001
1-31,(33-35)
2403600000200020001
2403600000900020001
663050
04251813001
2403600000900130001
2403600000900180001
(1-73),(2-48)
2403600000900030001
2403600000900060001
2403600000900010001
2403600000900190001
2403600000900140001
2403600000900160001
2403600000900230001
2403600000900170001
2403600000900100001
2403600000900080001
2403600000900040001
2403600000900090001
2403600000900070001
2403600000900260001
2403600000900110001
2403600000900150001
2403600000900270001
2403600000900280001
2403600000900290001
2403600000900210001
2403600000900120001
2403600000900240001
2403600000900200001
2403600003100010001
04251813003
2403600003100030001
2403600003100020001
2403600002100020001
663053
04251813002
2403600002100010001
2403600000500050001
663047
04251807001
2403600000500010001
2403600000500120001
1-15,(17-31)
2403600000500040001
2403600000500080001
2403600000500030001
6-24
2403600000500060001
2403600000500020001
2403600000500110001
2403600000500090001
2403600001500010001
04251807003
2403600001500040001
2403600001500020001
2403600003200030001
663040
04251807002
2403600003200010001
2403600003200020001
2403600003200040001
2403600002400040001
04251807004
2403600002400020001
2403600002400010001
2403600002400090001
2403600002400080001
1-5,(7-17)
2403600002400030001
2403600002400050001
2403600001400170001
663051
04251828001
2403600001400160001
2403600001400080001
2403600001400180001
1-17,(19-23)
2403600001400190001
1-30,(32-50)
2403600001400010001
2403600001400150001
2403600001400140001
2403600001400130001
2403600003800040001
663052
04251828004
1-14,(16-18)
2403600003800030001
2403600003800050001
1-29,(41-47)
2403600003700050001
04251828003
2403600003700070000
2403600002900010001
04251828002
2403600002900020001
2403600002900030001
1-6,(8-12)
2403600001200010001
663046
04251819001
2403600001200030001
2403600001200050001
1-15,(17-33)
2403600001200020001
2403600001200060001
2403600001200040001
2403600002300010001
04251819003
2403600002300020001
2403600002300070001
1-31,(35-47)
2403600003300020001
04251819002
2403600003300030001
2403600003300010001
2403600003300040001
2403600000400010001
04251825001
2403600000400040001
2403600000400020001
2403600000400060001
2403600000400080001
2,4,(1-27)
2403600000400030001
2403600000400100001
2403600000400180001
2403600000400050001
2403600000400110001
2403600000400120001
2403600000400130001
(1-7),9-22
2403600000400190001
2403600003500040001
04251825002
2403600003500050001
1-18,(20-26)
2403600003500070001
2403600003500060001
2403600003500080001
(3-35),(2-20)
2403600003500090001
2403600003500020001
(25-29),(2-34)
2403600003500110001
2403600003500030001
1-9,15
2403600003500130001
2402200001900010001
662040
2421
04226814006
2402200002900010001
04226814003
2402200003800010001
04226814007
(1-25),(2-80)
2402200003000010001
04226814004
2402200001600010001
662043
04226802002
(2-18),9
2402200001600020001
2-3,9-11,14,16
2402200002600030001
04226802004
2402200002600040001
2402200002600020001
(1-9),20-55
2402200002200020001
662050
04226802005
2402200001200020001
04226802003
2402200000200070001
04226802001
2402200000200030001
1-7,(9-23)
2402200000200080001
2402200000200060001
2402200000200010001
2402200000200020001
2402200000200050001
1-7,(9-39)
2402200000300140001
662045
04226804001
2402200000300120001
2402200000300100001
2402200000300170001
2402200000300020001
2402200000300040001
2402200000300080001
2402200000300050001
2402200000300130001
2402200000300010001
2402200000300070001
2402200000300060001
2402200000300090001
2402200000300150001
2402200000300110001
2402200000300030001
2402200001800060001
04226804002
2402200001800140001
2402200001800130001
2402200001800110001
2402200001800120001
2402200001800020001
2402200001800010001
2402200001800150001
1-8,(10-32)
2402200001800070001
2402200001800040001
2402200001800090001
1,(4-6),33-39
2402200001800050001
2402200001800030001
2402200001800080001
2402200002800010001
04226804005
2402200000600030001
04226554000
1-137,(139-181)
2402200000600070001
1-233
2402200000600220001
2402200000600240001
1-207
2402200000600170001
1-203
2402200000600190001
2402200000600140001
1-24,(26-78)
2402200000600080001
2402200000600360001
2402200000600230001
2402200000600180001
2402200000600110001
2402200000600040001
2402200000600130001
2402200000600160001
1-20,(22-100)
2402200000600210001
1-42,(44-58)
2402200000600120001
2402200000600050001
2402200000600010001
1-22,(24-32)
2402200000600200001
2402200000600090001
1-7,(9-13)
2402200000600150001
2402200000600020001
2402200000600270001
2402200000600260001
2402200000600280001
2402200000600370001
2402200000600100001
2402200000600380001
2402200000600310001
2402200000600060001
2402200000600390001
1-26,(28-40)
2402200000400030001
04226809001
2402200000400040001
1-20,(22-36)
2402200000400020001
2402200000400060001
2402200000400050001
2402200000400010001
2402200003300040001
04226809007
(2-20),28,(5-25)
2402200003300050001
1-12,16-24,27-46
2402200002700010001
04226809004
2402200003200010001
04226809003
2402200002000010001
04226809011
1,5-13,15
2402200002100010001
04226809009
1-11,16-21
2402200003100020001
04226809005
2402200003100010001
2402200003700010001
04226809013
2402200003400010001
04226809002
2401200000100230001
663020
04214551000
1-516
2401200000100010001
2401200000100330001
1-42,(44-46)
2401200000100440001
2401200000100070001
1-15,(17-21)
2401200000100040001
2401200000100970001
1-17,21
2401200000100750001
1-106,(108-172)
2401200000100310001
(4-26),(1-31)
2401200000100090001
2401200000100120001
1-9,(11-17)
2401200000100100001
2401200000100030001
2401200000100250001
2401200000100150001
2401200000101020001
1-2,7-8,22-24
2401200000101030001
1-30,(32-76),47
2401200000100190001
1-7,10,13
2401200000100490001
2401200000100170001
2401200000100580001
1,5,11,15
2401200000100630001
1-8,23
2401200000100380001
1-14,20
2401200000100320001
1-11,(13-21)
2401200000100180001
2-12,18
2401200000100220001
2401200000100700001
1-11,15
2401200000100420001
1-23,25,31
2401200000100140001
2401200000100460001
1,3,7,10,14,19
2401200000100770001
2401200000100890001
1-4,11,19,25
2401200000100400001
3,8,16,21,22,27,30
2401200000100650001
2401200000100430001
2401200000100410001
2401200000100340001
5-8,13,15-16,18
2401200000100640001
2401200000100690001
2,10,10
2401200000100730001
2401200000101130001
2401200000100280001
1-3,5,10
2401200000100260001
2401200000100110001
1-8,(10-22)
2401200000100350001
1-23,30-31
2401200000100080001
2401200000100450001
2401200000100270001
2401200000100290001
(8-16),(30-38),48,62
2401200000100590001
5-8,(10-14)
2401200000100880001
2401200000100540001
2401200000100530001
2401200000100620001
2-8,(10-16)
2401200000100300001
5,(15-17)
2401200000100810001
4,7,11-13
2401200000100670001
2401200000100850001
2,2,2,6,11
2401200000100740001
10,4
2401200000100710001
1-3,8-9,(14-26)
2401200000100900001
2401200000101080001
2401200000100390001
2401200000101040001
2401200000100870001
15,20,24,30
2401200000101050001
2401200000100360001
2401200000100600001
4,6,7,9
2401200000100860001
(1-35),(2-18)
2401200000100210001
2401200000100060001
2401200000100510001
2401200000100200001
2401200000100160001
1-26,(28-50)
2401200000100020001
2401200000100370001
3,7,11,2736,40,41,47,48,55
2401200000100610001
2401200000100500001
2401200000100130001
2401200000100470001
2401200000101100001
2401200000101110001
2401200006200010001
04214551005
1-18,(20-44)
2401200006200020001
2401200006200040001
2401200006200030001
2401200006200070001
2401200006200100001
2401200003200020001
04214551002
4-5,8-10,13,13
2401200003200090001
2401200003200050001
2401200003200040001
2401200003200030001
2401200003200060001
1-8,(9-25)
2401200003200070001
(3-61),(2-28)
2401200003200080001
(1-30),(2-50)
2401200005800020001
04214551004
14,20
2401200005800100001
2401200005800030001
2401200005800080001
12-34
2401200005800040001
2401200005800060001
2401200005800050001
2401200003900010001
04214551003
2401200003900020001
2401200002100070001
663012
04214813001
2401200002100170001
2401200002100160001
2401200002100040001
2401200002100100001
2401200002100150001
2401200002100020001
2401200002100080001
2401200002100110001
2401200002100140001
2401200002100050001
2401200002100060001
2401200002100010001
2401200002100120001
2401200002100090001
2401200002100030001
2,5,6,(13-37)
2401200002100220001
2401200002100230001
1-6,(8-18)
2401200002100240001
2401200002100260001
1,3,9
2401200002100200001
2401200002100250001
2401200002100130001
1,4
2401200002100210001
2401200001200020001
04214813002
2401200002400090001
663027
04214818001
2401200002400070001
2401200002400100001
2401200002400110001
2401200002400030001
2401200002400050001
2401200002400060001
2401200002400040001
2401200002400010001
1-151
2401200002400020001
2401200002400120001
1,4,5,9,11
2401200002600030001
04214818003
2401200002600020001
2401200002600010001
2401200009200010001
663013
04214818002
1-9,(11-23),36
2401200009200020001
2401200009200030001
2401200004000340001
663024
04214834001
2401200004000170001
2401200004000300001
2401200004000110001
2401200004000080001
2401200004000060001
2401200004000070001
2401200004000140001
2401200004000120001
2401200004000400001
2401200004000290001
2401200004000190001
2401200004000380001
2401200004000180001
2401200004000150001
2401200004000250001
2401200004000230001
2401200004000260001
2401200004000130001
2401200004000240001
2401200004000100001
2401200004000280001
2401200004900020001
04214834004
2401200004900010001
2401200004900070001
2401200004900060001
4-17
2401200004900030001
11-19
2401200004900050001
2401200004900040001
2401200006400010001
04214834007
2401200006400020001
2401200006400030001
2401200000900010001
04214834006
2401200000900020001
2401200007700010001
04214834000
2401200007100020001
04214834008
2401200007100010001
2401200001800010001
04214834003
2401200001800040001
2401200001800080001
2401200001800110001
2401200001800060001
2401200001800070001
2401200001800020001
2401200001800100001
2401200001800050001
2401200005200010001
04214834005
2401200005200020001
2401200005200050001
2401200005200080001
2401200005200120001
2401200005200030001
2401200005200130001
2401200005200110001
2401200005200040001
2401200005200150001
2401200005200140001
2-12,26
2401200001400040001
04214834002
2401200001400060001
2401200001400220001
2401200001400230001
2401200001400080001
2401200001400090001
2401200001400100001
2401200001400110001
2401200001400250001
2401200001400120001
2401200001400030001
2401200001400160001
2401200001400180001
2401200001400190001
2401200001400130001
2401200001400150001
2401200001400170001
2401200001400210001
2401200001400070001
1-19,26,29,37
2401200003600300001
663029
04214828001
2401200003600090001
2401200003600130001
2401200003600060001
2401200003600080001
2401200003600190001
1-34,(36-60)
2401200003600040001
2401200003600050001
2401200003600340001
2401200003600140001
2401200003600030001
2401200003600570001
6,10,17,22
2401200003600530001
2,3,8,12
2401200003600560001
2401200003600310001
1-11,16,(13-25)
2401200003600010001
(6-32),38,48,70,1,(9-17),(25-69)
2401200003600290001
7,9,12,13,16
2401200003600410001
2401200003600020001
2401200003600100001
2401200003600120001
2401200003600110001
1,(2-18),(17-25)
2401200003600270001
4,11,19
2401200003600350001
2,2,14,20
2401200003600360001
1,3,16-20
2401200003600280001
1-26,30,36
2401200003600150001
2401200003600180001
(2-40),(1-85)
2401200003600170001
2401200003600200001
2401200003600490001
1-16,(18-28)
2401200003600210001
1-11,(15-19)
2401200003600240001
2401200003600230001
2401200003600220001
1-16,20
2401200003600250001
1-37,(39-47)
2401200003600260001
2401200003600330001
2401200003600320001
1,5,5,9,12,19
2401200003600470001
2401200003600070001
2401200003600640001
8,(9-13)
2401200003600430001
2401200003600400001
(1-3),(2-32)
2401200005400010001
04214828004
2401200005400060001
2401200005400120001
2401200005400070001
2401200005400030001
2401200005400080001
2401200005400020001
2401200005400090001
2401200005400110001
2401200007500020001
660910
04214828000
2401200007500010001
(1-11),8
2401200007300010001
04214828002
2401200007300050001
2401200007300060001
(1-25),(2-4),(14-24)
2401200007300080001
2401200007300090001
2401200007300030001
2401200007300040001
2401200007300070001
2403600001000010001
663055
04251816001
2403600001000020001
2403600001000030001
2403600001000040001
2403600001000070001
2403600001000090001
2403600000300010001
663042
04251816004
2403600000300020001
2403600000700010001
04251816003
2403600000700030001
2403600000700040001
2403600000700020001
2403600004300040001
04251816005
2403600004300020001
2403600004300050001
2403600004300030001
2403600004300010001
2403600001100010001
04251816002
2403600001100020001
2403600001100120001
2403600001100050001
2403600001100070001
2403600001100030001
2403600001100040001
2403600001100100001
2403600001100110001
2403600001100060001
2403600001100080001
2403600001100090001
2403600001100160001
2403600001100140001
2403600001100180001
2401200004100050001
663030
04214843006
2401200004800040001
04214843003
2401200004800060001
2401200004800070001
1-26,(28-38)
2401200004800010001
2401200004800020001
2401200004800050001
2401200004800080001
2401200004800100001
1-84,(86-106)
2401200004700010001
04214843004
2401200004700020001
2401200004700080001
1-17,(19-27)
2401200004700050001
2401200004700060001
2401200004700070001
2401200004700090001
1-67,(69-89)
2401200001900020001
04214843002
1-42,(44-82)
2401200001900030001
2401200001900040001
2401200001900050001
2401200005700010001
04214843007
2401200005700020001
2401200005700030001
2401200006100040001
04214843005
1-35,(37-41)
2401200006100030001
2401200006100090001
2,(3-9)
2401200006100100001
2401200006100010001
2401200006100160001
2401200006100150001
2401200006100140001
2401200006100050001
2401200006100080001
2401200006100060001
1-11,(13-19)
2401200006100070001
1-71,(73-95)
2401200006500100001
04214843001
1-45,(47-63)
2401200006500090001
2401200006500030001
2401200006500210001
2401200006500050001
2401200006500150001
2401200006500220001
1-6,(7-15)
2401200006500190001
1-13,(15-33)
2401200006500130001
2401200006500140001
2401200006500080001
(1-81),(2-42)
2401200006500010001
2401200006500250001
2401200006500260001
2401200006500270001
2401200006500230001
2401200006500280001
2401200006500300001
2401200006500160001
2401200006500170001
2401200006500240001
2401200006500120001
(2-14),(11-19)
2401200006500290001
2-191
2402200000100010001
04226551000
2402200000100040001
1-12,(13-25)
2402200000100060001
662051
1-19,27-42
2402200000100070001
2402200000100140001
1-29,(31-45),(48-52)
2402200000100120001
2402200000100130001
2402200000100150001
2402200000100230001
(1-37),(2-29)
2402200000100170001
2402200000100190001
2402200000100160001
1-17,20
2402200000100210001
2402200000100200001
4-15
2402200000100180001
3-4,9-12
2402200000100220001
(3-7),(4-20)
2402200000100250001
2402200000100280001
2402200000100290001
2402200000100260001
2402200000100030001
2402200000100300001
2402200000100340001
2402200000100330001
2402200000100370001
(1-85),(2-104)
2402200000100380001
2402200000100350001
2402200000100400001
3,8-11
2402200000100390001
1-215
2402200000100360001
(1-73),(2-52),76
2402200000100410001
2402200000100470001
2402200000100460001
2402200000100420001
2-23,31
2402200000100430001
2402200000100450001
2402200000100480001
15,23,25,(26-38)
2402200000100490001
2402200000100500001
(4-8),(23-25),(26-38),46
2402200000100510001
2402200000100020001
2402200000100520001
2402200001700060001
662054
04226551001
2402200001700020001
3,6,16,18,20
2402200001700080001
1-6,10-18,20,24
2402200001700070001
2,6,10-14,19,22,24-28,32
2402200001700010001
(3-19),(4-32)
2402200001700030001
2402200001700050001
2402200001700040001
5-41,45,47,51-53,55
2402200001700090001
2401200006700080001
663034
04214846001
2401200006700050001
2401200006700020001
2401200006700010001
2401200006700150001
1-29,(69-77)
2401200006700030001
2401200006700060001
2401200006700040001
2401200006700090001
2401200006700070001
2401200006700140001
2401200006700170001
3-4
2401200006700180001
2401200006700160001
(1-47),(2-24)
2401200003000040001
04214846002
1,2,6,12
2401200003000010001
2401200003000070001
1-4,10,12
2401200003000080001
2401200003000090001
2401200003000060001
2401200003000030001
2401200003000050001
2401200005300040001
04214846003
2401200005300010001
2401200005300060001
6-10,16,20
2401200005300070001
2,(8-12)
2401200005300030001
2401200000600020001
04214846004
2401200000600010001
4,5,9,14,15
2401200000600060001
(1-29),(4-18)
2401200000600070001
2401200000600110001
1-5,10-11,34,(25-39)
2401200006600020001
04214846005
10,21,22
2401200006600060001
2401200006600010001
2401200006600040001
2,5,6,9-19,20,23,27
2401200003100030001
04214846007
1-15,25
2401200003100050001
2401200003100080001
2401200003100020001
2402100000500060001
663479
04224806001
1-5,(7-23)
2402100000500050001
13,15,26
2402100000500040001
2402100000500030001
2402100000500010001
2402100000500020001
2402100000500070001
2400800000300010001
663442
04209804001
1-18,20,21
2400800000300020001
1-15,17,19-29
2400800000300030001
2400800000300140001
2400800000300050001
1-9,13-33,36-43,(45-51),50
2400800000300060001
2400800000300070001
1-6,8,9
2400800000300080001
2-3,7-9,11-14,16,19-22
2400800000300090001
1-29,(39-51)
2400800000300120001
2400800001000020001
04209804002
2400800001000030001
2400800001000010001
2400800001000040001
1-7,9,11,(12-24),17,(21-29)
2400800000700010001
663463
04209813001
2400800000700020001
2400800000700030001
1-12,14-18,21-44,46,48
2400800000700040001
2400800000700110001
1-6,8-18,(20-30)
2400800000700060001
2400800000700070001
2400800000700080001
2400800000700090001
1-11,14-17,19-28
2400800002500180001
663458
04209831001
1,3,5,7-10,12-20,22-35,(37-49),53,57,59
2400800002500010001
(4-8),(12-18),19-26,(27-39)
2400800002500020001
2400800002500190001
2400800002500150001
1-10,12,14,21
2400800002500090001
1-6,8-12,14-16,18,20
2400800002500030001
5,(6-10),11,15-17,19-32,34
2400800002500040001
2,7,8,11
2400800002500120001
1-3,(5-15)
2400800002500050001
1-3,5,6
2400800002500110001
2400800002500140001
2400800002500060001
1,3-17,20,22,23,25-30,32
2400800002500070001
2400800002500080001
3-6,15,17,21,22,24
2400800002500160001
2400800002100110001
663457
04209825001
1-19,21-46,48-58,60-64,66,68,69-72,74-80
2400800002100140001
82,83-87,89,91,93,95,97
2400800002100140002
2400800002100020001
2400800002100090001
1-27,29-33,35,37-47,49
2400800002100030001
2400800002100120001
1-19,21-31,33,35,(39-47)
2400800002100040001
2400800002100080001
1-12,(13-17),19-41,43-46,(48-56)
2400800002100050001
1-12,14,16-38,40,42,46,48-63,(65-71)
2400800002100150001
72-80,82-90
2400800002100150002
1-27,29-42,44
2400800002100070001
2400800001400020001
663437
04209818001
2-27,29
2400800001400050001
2400800001400310001
2400800001400210001
2400800001400290001
2400800001400060001
2400800001400070001
3-10,12
2400800001400270001
2400800001400080001
2400800001400090001
2400800001400100001
(4-10),(1-9)
2400800001400110001
2400800001400120001
2400800001400130001
1-15,(17-27)
2400800001400140001
2400800001400150001
2400800001400230001
2400800001400160001
2400800001400300001
2400800001400220001
2400800001400170001
2400800001400330001
2400800001400280001
2400800000900010001
663448
04209818002
1-72,74,76
2400800000900110001
2400800000900030001
2400800000900040001
1-65,67
2400800000900050001
2400800000900080001
2400800000900130001
2400800000900060001
1-51,(53-57)
2400800000900070001
2400800000900120001
2400800002400030001
04209830001
1-5,7,9,26,28,30,42,47
2400800002400040001
2400800002400350001
1-10,(12-22)
2400800002400060001
3,5,9,11,15,17
2400800002400320001
2400800002400070001
2400800002400080001
2400800002400090001
1,2,4-8,14,18,20,24
2400800002400310001
1,4-6,8,10,12,14,14 
2400800002400100001
2-34,(36-44)
2400800002400110001
2400800002400120001
1-23,25-51,53-55,57,59,60,(61-75)
2400800002400010001
1-29,31-40,42-44,46-48,50-52
2400800002400020001
2400800002400130001
5,42
2400800002400380001
2400800002400270001
1-5,9-11,13-15,17-28,(30-36),35,44,46
2400800002400140001
2400800002400140002
1-19,21-31,33-38,40,42
2400800002400150001
1,3,5-25,27,28
2400800002400160001
2400800002400170001
1,3,7,9,10,11,15,19
2400800002400390001
1-41,43,44
2400800002400180001
(1-5),6-17
2400800002400200001
1,2,6,8,9
2400800002400400001
1,3,23
2400800002400410001
2400800002400210001
1,2,4-6,8-11,13,14,17,18
2400800002400330001
1,4-12,(14-20),24-26,34
2400800002400220001
1-33,(35-59)
2400800002400230001
2400800002400240001
(2-8),9
2400800002400250001
2400800002400260001
2400800001200010001
663451
04209830002
2400800001200120001
2400800001200110001
2400800001200080001
2-5,7,9
2400800001200020001
2400800001200030001
2400800001200100001
2400800001200040001
1,3,4,9-15,17
2400800001200050001
2400800001200060001
1 ,20-23,54-56,63,65,74-81
2402100001900080001
663496
04224812001
2402100001900170001
2402100001900090001
2-4,8,10-12
2402100001900110001
(1-9),(13-17)
2402100001900130001
2402100001900050001
2402100001900100001
2402100001900200001
1-10,12-36
2402100001900010001
1,2,5-8
2402100001900070001
1-3,5,9,11,12,14
2402100001900060001
2402100001900160001
2402100001900120001
1-6,(8-14)
2402100001900140001
2402100001900180001
1-5,9,10
2402100001900040001
1,3-7,10-23,25,27-33,65,69,72
2402100001900030001
1,2,4-15,(18-26)
2402100001900150001
2402100001900020001
1,2,6,7
2402100001600070001
663495
04224813001
2402100001600080001
1-3,12
2402100001600090001
4,7,11,12,21,26,27,31,42,48,49,59,54,62
2402100001600060001
2402100001600060002
2,5,6,7,9,15
2402100001600150001
2402100001600100001
2402100001600110001
8,10,12,20
2402100001600030001
2402100001600050001
3,(15-21),45,47
2402100001600020001
1,3,6,7,9,10,13,14,16,18
2402100001600010001
2402100001600130001
11-16,(3-7)
2402100001600140001
2402100001600160001
2402100001600040001
(1-15),6
2402100000600060001
663497
04224805001
2,3,4,6,8
2402100000600080001
2402100000600070001
2402100000600120001
2402100000600100001
2,5,7-11,15,17
2402100000600040001
1-7,9,(10-26)
2402100000600010001
3-7,9-11,13
2402100000600050001
1-5,7,8,(11-17)
2402100000600030001
2402100000600110001
2402100000600090001
(10-24),17,21
2402100000600020001
2402100002200030001
663498
04224805002
1-7,9,14,18,22,24,26,30,34,48,50,54,58
2402100002200010001
60,62
2402100002200010002
5,5 
2402100002200040001
1-6,11-14,(16-22),19
2402100002200020001
2402100002300140001
663485
04224000000
2402100002300130001
1-10,12
2402100001000280001
04224807001
2402100001000220001
2402100001000230001
2402100001000240001
2402100001000190001
2402100001000250001
1-9,11-16
2402100001000200001
2402100001000260001
9,16,17,17 ,29
2402100001000150001
2402100001000270001
2402100001000290001
2402100001000310001
2402100001000300001
2402100001000180001
2402100001000330001
4,8,10-18,20,22,24-29,31,33
2402100000400110001
663478
04224803001
1-7,9-25,27,30-32,34
2402100000400010001
1-12,14,16,18,24
2402100000400080001
2402100000400100001
2,4-10,12,20,22,24,(32-38)
2402100000400040001
1-11,(13-25)
2402100000400090001
1-22,24,26-31,33,(34-46),41,45,47-49
2402100000400070001
51-57,59-69,71,73-84,(86-108)
2402100000400070002
2402100000400030001
2402100000400120001
18,20,22,27,29
2402100000400020001
2-4,6,8
2402100002500030001
04224803003
1-7,9-12,15-17,19,21
2402100002500010001
2-7,9-12,14-19,21
2402100002500020001
2402100002500060001
2402100000800070001
04224803002
2402100000800080001
1-5,12,13,14
2402100000800060001
1-15,18,(19-27),30,31,33,35,37,38,39,41
2402100000800020001
2402100000800010001
1-14,16-18,21-23,25-31
2402100000800030001
2,3,7,9-15
2400800001800010001
663454
04209824001
1-3,5
2400800001800020001
2400800001800050001
2400800001800060001
1-9,11,13-19
2400800001800080001
2400800001800090001
2400800001800100001
1-5,7,12,13,15,17
2400800001800120001
2400800001800130001
2400800001800140001
2400800001800150001
1-3,5-13,17-19,21,23,24
2400800001800160001
2400800001800180001
2400800001300100001
663455
04209823002
2400800001300130001
2400800001300080001
2400800001300090001
2,4-8,10-12,14,16
2400800001300010001
2400800001300070001
2400800001300120001
2400800001300050001
1-11,13-20
2400800001300040001
2400800001300110001
2400800001900010001
663469
04209823001
2400800001900020001
(15-21),(25-29),1,3-13
2400800001900030001
2400800001900140001
2400800001900040001
2400800001900150001
2400800001900110001
2400800001900050001
2400800001900090001
2400800001900170001
2400800001900120001
2400800001900060001
1-8,(10-16),20
2400800001900070001
2400800001900130001
2400800001900160001
1,3,4,6,9,10,12,13,16-29,31
2400800001900080001
1-9,13,15-22,24-28,30-33,35,36,38,40-43
2402100000700010001
663470
04224804001
45,45,46,49,53-55,57-59,62-66,74-76
2402100000700010002
(80-84),85,88,90-95,100,101,106,109,110
2402100000700010003
112,113,116,118,122,123,(128-134),133
2402100000700010004
(2-8),(32-38),(58-68),(72-82),14,18
2402100000700040001
(88-94),(118-122),(130-134),20,24,28
2402100000700040002
(198-206),(264-268),(278-286),42,48
2402100000700040003
(292-296),(300-308),110,112,140,142
2402100000700040004
146,148,156,158,168,172,190,212,214,224
2402100000700040005
230,236,240,246,248,258,274,21,31,49,51
2402100000700040006
(1-15),(37-45),(55-59),(63-79),85,83
2402100000700040007
(89-95),(103-107),(181-185),99,111
2402100000700040008
(189-195),(227-231),(255-263),119
2402100000700040009
166347
121,127,131,135,143,171,175,205,211,213
2402100000700040010
217,235,239,245,245
2402100000700040011
(2-12),16,(22-28),34,36,(42-46),70,72
2402100000700020001
(52-64),(86-100),110,118,120,124,83,89
2402100000700020002
(1-11),15,17,21,(33-39),45,(49-57),93
2402100000700020003
(63-73),(97-101),109,113,115,117,121
2402100000700020004
137,141,149,155
2402100000700020005
3-5,9,13,14,16,22,25,26,27,31,33,35,38
2402100000700030001
46,49,50-53,60,64,65,70,72,75,79,81,87
2402100000700030002
90,92,96,100,103,110,112,118,126,132,138
2402100000700030003
(142-150)
2402100000700030004
1-8,(10-20),17,21,23,24,26,27,29,30,32
2402100000700050001
34,35,37,39
2402100000700050002
2402100000700070001
2402100000700080001
6,6,7,15,16,18,19,20,22,30,32,3,35,44
2402100000700060001
2402100000700060002
1,3,6,8,10,12,14,16
2402100000700110001
2402100000700090001
2402100000700100001
1-3,6,8,10
2402100000700370001
2402100000700220001
1,1,5,6,9-12
2402100000700360001
2402100000700200001
6,9,11,18,20,24
2402100000700190001
2402100000700250001
1,6,7,8,12,13
2402100000700390001
2402100000700150001
1,5-10,15,20
2402100000700170001
2-7,9,11,22,28,(30-36)
2402100000700130001
2402100000700240001
2402100000700270001
1,3-5,7-10,(12-20)
2402100000700140001
11-13,18,22,27,29,31
2402100000700180001
2400800002200010001
663441
04209828001
2400800002200020001
2400800002200030001
2-6,8,10
2400800002200040001
2400800002200050001
1,2,3,3,57,(9-23)
2400800002200060001
2400800002200420001
2400800002200080001
1-27,29,31,33-37,40
2400800002200090001
2400800002200100001
2400800002200110001
2400800002200120001
2400800002200130001
2400800002200140001
1,2,4,5-9,11,13,15,16,25,27,27,20
2400800002200150001
1-9,11,12
2400800002200160001
1-20,22-25,33-37,(39-63)
2400800002200170001
1-3,5-14,15,17,19,19,19,23,23,23,21
2400800002200180001
25,27,29
2400800002200180002
2400800002200190001
1-4,6,8,10,12,13,14
2400800002200200001
1-2,4-7,9,11
2400800002200340001
2400800002200210001
2400800002200220001
1-15,17-24,26-30,33,35,37,39
2400800002200230001
2400800002200240001
2400800002200250001
2400800002200260001
1-28,30-34,36
2400800002200280001
1-6,9-14,16,15
2400800002200270001
1-11,13,15
2400800002200290001
2400800002200300001
1-6,8-14
2400800002200310001
5,7,(9-17)
2400800002200320001
1-10,12,14,19,21,26
2400800002200330001
1,2,4,5-8,10,12
2400800002200350001
1-22,24,30,32,36,38,40
2400800002200360001
2400800002200370001
2400800002200410001
2400800002200380001
2401400001300080001
662825
04216816001
2401400001300140001
2401400001300140002
2401400001300120001
2401400001300120002
2401400001300070001
(10-18),(9-17)
2401400001300070002
2401400001300050001
(10-14),(9-13)
2401400001300050002
2401400001300010001
2401400001300210001
2401400001300240001
(2-6),1
2401400001300150001
2401400001300100001
2401400001300200001
2401400001300230001
2401400001300250001
2401400001300030001
(10-16),(9-15)
2401400001300030002
(18-24),(19-25)
2401400001300030003
(2-14),(1-61)
2401400002000050001
662831
04216829001
(18-60)
2401400002000050002
2401400002000010001
(2-14),(1-25)
2401400002000060001
2401400002000030001
(2-26),(1-27)
2401400002000040001
2401400002000020001
2401400002000070001
2401400001600010001
662823
04216822001
2401400001600020001
(32-62),(31-61)
2401400001600020002
2401400001600060001
2401400001600060002
2401400001600030001
2401400001600030002
2401400001600070001
2401400001600070002
2401400001600040001
2401400001600050001
2401400001600050002
2401400002100050001
662824
04216831001
2401400002100050002
2401400002100030001
2401400002100060001
(4-24),(3-25)
2401400002100040001
(2-28),(1-7)
2401400002100020001
2401400002100020002
2401400002100010001
2401400002100070001
2401400000300030001
662834
04216825002
(1-5),6
2401400000300040001
(4-6),(1-3)
2401400000300050001
2401400000300060001
2401400000300090001
2401400000300080001
2401400000300010001
2401400000300020001
(14-38),(15-55)
2401400000300020002
(61-63)
2401400000300020003
2401400001900050001
662833
04216825001
2401400001900040001
2401400001900010001
(28-46),(29-49)
2401400001900010002
(50-60),(51-59)
2401400001900010003
(2-140),(1-141)
2401400001900020001
2401400002700010001
04216834004
2401400002400010001
662840
04216834002
2401400002400030001
2401400002300240001
04216834001
2401400002300170001
2401400002300210001
2401400002300150001
2401400002300220001
2401400002300230001
2401400002300030001
2401400002300050001
(12-58),(15-57)
2401400002300070001
2401400002300010001
2401400002300040001
2401400002300060001
2401400002300080001
2401400002300090001
(2-80),(1-41)
2401400002300110001
2401400002300200001
(2-134),(1-113)
2401400002300130001
2401400000100420001
662820
04216810001
2401400000100430001
2401400000100440001
2401400000100450001
2401400000100470001
2401400000100480001
2401400000100490001
2401400000100500001
2401400000101240001
2401400000100530001
2401400000100540001
(2-22),(3-23)
2401400000101150001
2401400000100560001
2401400000100570001
(2-126),(1-127)
2401400000100550001
2401400000100590001
2401400000101100001
(2-136),(1-137)
2401400000100610001
2401400000101210001
2401400000100640001
(2-154),(1-155)
2401400000100120001
2401400000100650001
2401400000100660001
(2-190),(1-189)
2401400000100670001
(2-176),(1-175)
2401400000100040001
2401400000100700001
2401400000100710001
2401400000100190001
2401400000100720001
(4-12),(5-11)
2401400000100730001
2401400000100290001
(2-36),(3-35)
2401400000100740001
2401400000100750001
2401400000100300001
2401400000101140001
(2-122),(1-121)
2401400000100050001
2401400000100790001
2401400000101080001
2401400000100240001
2401400000101170001
(2-126),(1-125)
2401400000100830001
(2-100),(1-101)
2401400000100200001
(2-68),(1-69)
2401400000100860001
2401400000100210001
1,10,13,24,28
2401400000101120001
2401400000100880001
2401400000100890001
2401400000100110001
2401400000101050001
2401400000100930001
2401400000100940001
2401400000100950001
2401400000100960001
(2-186),(1-187)
2401400000100970001
2401400000100220001
1,3,7,8,11,20
2401400000101160001
2401400000101010001
2401400000100070001
2401400000101030001
(2-6),10,(7-9)
2401400000101130001
2401400000100460001
2401400000100520001
2401400000100580001
2401400000100600001
2401400000100630001
2401400000101070001
2401400000100680001
2401400000101180001
2401400000100760001
2401400000100780001
2401400000100800001
2401400000100850001
2401400000100900001
2401400000100920001
2401400000101200001
2401400000101000001
2401400000101190001
2401400000101110001
2401400000100690001
2401400000100620001
2401400000100820001
2401400000101020001
(2-62),(3-61)
2401400002600010001
04216810002
2401400002600020001
2401400002600050001
2401400002600040001
2401400002600030001
2401400001500040001
04216810003
2401400001500050001
2401400001500020001
2401400001500030001
2401400001500010001
2401400001800020001
04216810004
2401400001800030001
2401400001800050001
2401400001800040001
2401400001800010001
2401400001400080001
662822
04216819001
2401400001400030001
2401400001400110001
2401400001400160001
2401400001400070001
2401400001400120001
2401400001400010001
(4-50),(3-49)
2401400001400130001
2401400001400150001
2401400001400140001
2401400001400100001
(2-134),(1-135)
2404300001100060001
662721
04259807001
2404300001100210001
2404300001100180001
2404300001100020001
(18-20),(15-41)
2404300001100150001
(6-18),(17-33)
2404300001100240001
(2-34),(1-27)
2404300001100050001
2404300001100220001
2404300001100190001
2404300001100080001
2404300001100170001
(2-12),(1-19)
2404300001100040001
(2-44),(1-31)
2404300001100070001
9,13
2404300001100270001
2404300001100100001
2404300001300020001
04259807004
2404300001300010001
2404300001700010001
662736
04259807003
(2-10),(3-7)
2404300001900050001
04259807002
(2-40),(1-27)
2404300001900020001
(2-14),(5-13)
2404300001900040001
2404300001900010001
(2-108),(1-107)
2404300000900010001
662735
04259803001
2404300000900100001
2404300000900020001
2404300000900060001
2404300000900030001
2404300000900150001
2404300000900090001
2404300000900080001
2404300000900070001
2404300000900040001
2404300003000010001
04259803002
(2-116),(1-117)
2404300001200010001
662730
04259810001
2404300001200020001
2404300001200030001
2404300001200040001
2404300001200050001
2404300001200060001
2404300001200070001
2404300001200080001
2404300001200090001
2404300001200100001
(2-112),(1-111)
2404300001200110001
2404300001200120001
2404300001200130001
(2-72),(1-73)
2404300001200140001
(2-56),(1-57)
2404300001200150001
2404300001200180001
2404300001200200001
2404300001200210001
2404300001200220001
(10-20),(11-19)
2404300001200230001
2404300001200280001
2404300001200290001
2404300001200300001
2404300001200310001
2404300001200160001
2404300001200170001
2404300002000020001
04259810003
2404300002000030001
2404300002000040001
2404300002000050001
2404300002100030001
662731
04259810006
2404300002100010001
2404300002100070001
2404300002100040001
2404300002400020001
04259810002
(2-98),(1-99)
2404300002800010001
04259810005
2404300002800050001
2404300002800070001
(2-76),(1-77)
2404300002900020001
04259810004
2404300002900030001
2404300002900040001
2404300002900050001
2404300002900070001
2404300002900080001
2404300002900090001
2404300002900130001
2404300002900140001
2404300002900150001
2404300002900200001
2404300002900210001
2404300002900100001
2404300002300010001
662722
04259815001
2404300002300160001
13,27,29
2404300002300150002
2404300002300040001
(2-40),(1-41)
2404300002300020001
2404300002300060001
2404300002300030001
2404300002300130001
2404300002300050001
2404300002300100001
2404300002300090001
2404300002300170001
2404300002300080001
2404300002300240001
2404300002300250001
2404300000600020001
662723
04259815002
2404300000600050001
2404300000600010001
2404300000600110001
2404300000600060001
2404300000600090001
2404300000600040001
2404300000600100001
2404300000400010001
04259815003
2404300000400020001
2404300002600050001
04259816001
2404300002600120001
(2-114),(1-115)
2404300002600090001
2404300002600070001
(2-58),(1-29)
2404300002600180001
2404300002600190001
(2-66),(1-43)
2404300002600060001
2404300002600020001
(2-46),(1-39)
2404300002600140001
2404300002600100001
(2-70),(1-63)
2404300002600110001
2404300002600200001
(2-84),(1-87)
2404300002600080001
2404300002500060001
662738
04259816002
2404300002500050001
2404300002500070001
(2-68),(1-71)
2404300002500040001
2404300002500030001
2404300002500020001
2404300002500010001
(2-130),(1-97)
2404300001600010001
04259816004
2404300001800080001
662737
04259816003
2404300001800020001
2404300001800040001
2404300001800060001
(2-10),(1-3)
2404300001800030001
(2-30),(1-17)
2404300001800070001
(2-62),(1-23)
2404300003100010001
04259816005
(2-54),(1-27)
2404300003100030001
(2-6),(3-9)
2404300001000010001
662733
04259805001
(2-18),(1-19),25
2404300001000020001
(2-4)
2404300001000030001
2404300001000040001
2404300001000050001
2404300001000060001
(2-30),(3-17)
2404300001000070001
2404300001000080001
(2-24),(3-5)
2404300001000090001
(2-14),20,(1-13)
2404300001000100001
2404300001000110001
2404300001000120001
2,18
2404300001000130001
(19-23),3,5,15
2404300001000130002
(2-24),(1-51)
2404300001000140001
2404300001000150001
2404300001000160001
2404300001000170001
2404300001000180001
2404300001000300001
2404300001000190001
2404300001000210001
2404300001000220001
2404300001000270001
2404300001000340001
(2-4),(5-7)
2404300001000350001
2404300000200010001
04259805003
2404300000200020001
2404300000200030001
2404300000200040001
(2-18),(3-13)
2404300000200050001
(2-42),(1-19)
2404300000800010001
662734
04259805002
2404300000800020001
2404300000800030001
2404300000800040001
(2-58),(3-21)
2404300001400010001
04259805004
2404300000700030001
04259805005
2404300000700010001
2404300000700020001
2404300001500020001
662732
04259814003
2404300001500050001
2404300001500040001
2404300001500030001
2404300001500010001
2404300001500070001
2404300001500060001
(112-134),(167-199)
2404300000500040001
04259814002
(152-166),(151-165)
2404300000500040002
(44-92),(45-89)
2404300000500010001
2404300000500060001
2404300000500020001
2404300000500050001
2404300000500070001
(2-4),(3-5)
2404300000500030001
2404300000500080001
2404300002200130001
04259814001
(2-148),(1-149)
2404300002200050001
2404300002200010001
(2-42),(1-43)
2404300002200030001
2404300002200140001
2404300002200080001
2404300002200070001
2404300002200060001
2404300002200110001
(2-60),(1-105)
2404300002200090001
(2-66),(1-51)
2404300002200120001
2404300002200100001
2404300002200190001
2404300002200020001
2404300000101510001
2404300000100080001
2404300000101160001
2404300000101150001
(1-29),2
2404300000100090001
(2-26),(1-37)
2404300000100110001
2404300000100100001
2404300000100120001
2404300000100130001
(4-18),(1-19)
2404300000100140001
2404300000100150001
2404300000100160001
2404300000101540001
2404300000101180001
2404300000100170001
2404300000100180001
2404300000100190001
2404300000100200001
2404300000100210001
2404300000101190001
2404300000101200001
2404300000100240001
2404300000100250001
2404300000100260001
2404300000100270001
(2-54),(1-25)
2404300000100280001
2404300000101210001
2404300000101220001
2404300000101230001
2404300000101240001
2404300000101930001
2404300000100290001
(2-40),(1-17)
2404300000101090001
2404300000100300001
2404300000101250001
2404300000100310001
2404300000100670001
2404300000101260001
2404300000100350001
2404300000100360001
2404300000100370001
2404300000100380001
2404300000100700001
2404300000101280001
(2-46),(1-9)
2404300000100390001
(2-48),(3-25)
2404300000100400001
(4-22),(3-29)
2404300000100410001
(6-16),(1-17)
2404300000100420001
(2-122),(1-123)
2404300000100430001
2404300000101290001
2404300000100440001
2404300000101300001
2404300000101310001
2404300000100460001
2404300000100470001
2404300000100480001
2404300000100710001
2404300000100490001
2404300000100500001
(46-62),(45-63),27
2404300000100530001
2404300000100540001
2404300000101330001
(2-8),(1-6)
2404300000101340001
2404300000100550001
2404300000100560001
(30-52),(33-51)
2404300000100570001
2404300000100580001
2404300000101350001
(2-86),(1-89)
2404300000100590001
2404300000100680001
2404300000100600001
2404300000101360001
2404300000100610001
2404300000100630001
2404300000100640001
2404300000100650001
2404300000101370001
2404300000100740001
17,18
2404300000100740002
2404300000100740003
2404300000101380001
2404300000101570001
(4-46),(1-47)
2404300000100750001
2404300000101390001
2404300000101400001
2404300000100760001
(2-28),(1-39)
2404300000100770001
2404300000100780001
2404300000101080001
(7-61)
2404300000100790001
2404300000100800001
2404300000101070001
2404300000100810001
2404300000100820001
2404300000101120001
2404300000100830001
2404300000101520001
2404300000100840001
2404300000101410001
(4-8),(1-7)
2404300000100850001
2404300000100860001
2404300000100870001
(2-108),(1-113)
2404300000100880001
2404300000101940001
2404300000100620001
2404300000101420001
2404300000100890001
2404300000100900001
2404300000101580001
2404300000100910001
2404300000100920001
2404300000101430001
2404300000100930001
2404300000100940001
2404300000101440001
2404300000102300001
2404300000101460001
2404300000100960001
2404300000101470001
2404300000100970001
(18-24),(19-29)
2404300000100970002
2404300000101100001
2404300000101480001
(2-70),(1-87)
2404300000100980001
2404300000100690001
2404300000101320001
2404300000100990001
2404300000101130001
2404300000100720001
2404300000101110001
(2-4),3
2404300000101000001
2404300000101490001
2404300000101010001
(2-50),(1-39)
2404300000101020001
2404300000101030001
2404300000101040001
2404300000101050001
2404300000101500001
2404300000100510001
2404300000100330001
2404300000100950001
2404300000100010001
2404300000100040001
2404300000100050001
2404300000101950001
(23-25),24
2404300000100060001
2401400000800050001
662835
04216813001
2401400000800010001
2401400000800020001
2401400000800080001
2401400000800040001
2401400000800030001
2401400000800070001
2401400000800060001
2401400000200030001
662841
04216802001
2401400000200010001
2401400000200050001
2401400000200040001
(2-8),(3-7)
2401400000200020001
2401400000200060001
2401400000200070001
2401400002800010001
04216802002
2401400001300090001
(2-82),(1-99)
2401400001300040001
(2-76),(3-73)
2401400001300130001
(2-38),(5-41)
2400001300000570001
662060
2444
04406000000
(40-64),(43-71)
2400001300000570002
662062
2400001300000650001
(33-35),(37-63)
2400001300000650002
(3-115),(2-114)
2400001300000710001
(117-119),(118-126)
2400001300000710002
662063
(4-40),(5-37)
2400001300000940001
(39-57),(42-68)
2400001300000940002
(2-34),(25-97),5
2400001300000930001
(36-148),(99-149)
2400001300000930002
(1-105),(16-90)
2400001300000970001
(92-186),(107-187)
2400001300000970002
2400001300002070001
(23-35),(24-32)
2400001300002070002
2400001300001180001
28-49,50
2400001300001180002
2400001300001270001
(97-159),(100-174)
2400001300001270002
(1-61),(2-116)
2400001300001530001
(67-71),122
2400001300001530002
(2-82),(11-117)
2400001300001580001
(84-134),(125-135)
2400001300001580002
(2-24),(3-39)
2400001300001570001
(32-64),(41-59)
2400001300001570002
2400001300001720001
68-84
2400001300001720002
42-60
2400001300001720003
2400001300001730001
2400001300001730002
(2-100),(9-93)
2400001300001820001
(99-161),(124-180)
2400001300001820002
(15-99),(36-84)
2400001300001810001
(86-122),(101-143)
2400001300001810002
2400001300000530001
662061
2400001300000560001
2400001300000580001
2400001300000590001
2400001300000600001
2400001300000620001
(1-137),(2-142)
2400001300000550001
2400001300000630001
(1-89),(2-92)
2400001300000640001
2400001300000660001
(1-69),(2-22)
2400001300000690001
(2-68),(3-51)
2400001300000700001
(2-4),(1-5),9
2400001300000670001
2400001300000720001
2400001300000730001
(1-147),(2-146)
2400001300000740001
2400001300000760001
2400001300002000001
2400001300000780001
(3-27),(2-18)
2400001300000790001
2400001300000810001
2400001300000840001
2400001300000860001
2400001300000870001
(1-51),(2-70)
2400001300000880001
2400001300001000001
(4-58),(3-61)
2400001300000890001
2400001300000900001
2400001300000910001
2400001300000920001
2400001300000960001
2400001300000980001
2400001300001010001
(1-6),7
2400001300000240001
2400001300001020001
2400001300001040001
2400001300001070001
(1-163),(2-164)
2400001300001080001
2400001300001090001
2400001300001100001
2400001300001110001
(3-127),(2-128)
2400001300001120001
(1-179),(2-178)
2400001300001130001
2400001300001140001
2400001300001150001
2400001300001160001
2400001300001190001
2400001300002100001
2400001300001210001
2400001300001220001
3-9,2
2400001300001240001
2400001300001250001
2400001300001230001
2400001300001930001
2400001300002060001
2400001300001300001
2400001300001310001
2-15,16
2400001300001320001
(1-65),(2-12)
2400001300001330001
(1-111),(2-92)
2400001300001350001
2400001300001340001
2400001300001940001
2400001300001970001
2400001300001380001
2400001300001390001
2400001300001400001
2400001300001410001
2400001300001420001
2400001300001460001
2400001300001470001
(1-13),(2-18),31
2400001300001480001
2400001300001960001
2400001300001500001
(1-33),(2-66)
2400001300001510001
2400001300001520001
2400001300001550001
2400001300001590001
(25-31),(2-8)
2400001300001600001
2400001300001630001
2400001300001950001
2400001300001650001
2400001300001890001
2400001300001670001
2400001300001680001
2400001300001690001
2400001300001700001
2400001300001710001
2400001300001740001
2400001300001750001
2400001300001790001
2400001300001800001
2400001300001910001
2400001300001830001
2400001300001840001
2400001300001850001
2400001300001860001
2400001300000520001
2400001300000510001
2400001300000500001
2400001300000180001
2400001300000010001
(3-35),(4-28)
2400001300000480001
2400001300000470001
2400001300000460001
2400001300000450001
2400001300000440001
2400001300000430001
2400001300000420001
2400001300000410001
2400001300000400001
2400001300000390001
2400001300000380001
2400001300000370001
2400001300000360001
2400001300000350001
2400001300000340001
2400001300000330001
2400001300000320001
2400001300000300001
2400001300000290001
2400001300000280001
2400001300000270001
2400001300000260001
2400001300000250001
(1-11)
2400001300000220001
2400001300000210001
2400001300001870001
(1-131),(2-188)
2400001300000050001
2400001300000170001
2400001300000160001
2400001300000150001
2400001300001540001
2400001300000140001
2400001300000130001
2400001300001990001
2400001300000100001
2400001300000090001
2400001300000080001
1-10,11
2400001300000070001
(1-47),(2-18)
2400001300000060001
2400001300000040001
1,1¡,2-14,15,15 ,16-27,28,29,30,32
2403300000200010001
04247802001
1-35,36,36 ,36¡,37-54,55,55 ,56,56 ,56¡
2403300000200020001
57,58
2403300000200020002
1-82,(84-95),96,96 ,(98-104)
2403300000200030001
2403300000200040001
2403300000200060001
2403300000300010001
04247804001
1,5,7,9,10-44
2403300000300020001
1-14,23,24
2403300000300030001
(94-103),104,104 ,105-107,108,108 ,110
2403300000300040001
111,111 ,111¡,112-140
2403300000300040002
1-12,(13-21)
2403300000300050001
1-51,52,52 ,53,54,54 ,55-62,63,63 ,64-76
2403300000300060001
77,77 ,78-93,97
2403300000300060002
2403300000300070001
1-4,9,10
2403300000300090001
1,1 ,2-6,10,12
2403300000300100001
2403300000400010001
663975
04247806001
1,2,2 ,2¡,3-44,45,45 ,46-62,63,63 ,64
2403300000400020001
65,65 ,65¡,101,101 ,102-160
2403300000400020002
1-24,25,25 ,25¡,26-29
2403300000400030001
1-6,7,7 ,(8-16),19
2403300000400040001
2403300000400050001
1-6,7,7 ,8,8 ,(10-18)
2403300000400060001
1,2,2 ,3-14
2403300000400070001
2403300000400080001
1-7,8,8 ,8¡,10,10 ,11-16,17,17 ,22
2403300000400090001
1,2,2 ,3-12
2403300000400140001
1-9,10,10 ,11-26
2403300000400160001
2403300000500010001
04247806002
1,2,2 ,3-18,(19-25)
2403300000500020001
2403300000500030001
2403300000500040001
2403300000600010001
04247824002
2403300000600020001
1-3,7,9-18,19,19 ,21,21 ,22-24,(25-39)
2403300000700020001
04247830005
1-3,5,13,18-74,75,75 ,76-83,84,84 ,85-98
2403300000700030001
2403300000800030001
04247802002
2403300000800070001
1,2,3,3 ,4-7,9
2403300000800080001
1-3,6,7,9,10,12
2403300000800120001
2403300000800200001
2403300000800210001
(1-8)
2403300000800220001
1-9,10,10 ,12,(11-21)
2403300000800130001
2403300000800140001
1-14,(15-35)
2403300000800150001
1-12,13,13 ,14,14 ,15-35,(36-62)
2403300000800160001
2403300000800170001
2403300000800180001
2403300000800190001
1-5,6,6 ,6¡,8,10,10 
2403300000800230001
2403300000900020001
04247824004
1-45,48
2403300000900030001
1,1 ,2-11
2403300000900040001
1-10,(11-17)
2403300000900050001
1-9,16,18
2403300000900060001
2403300001000010001
04247830002
15,17,19,20-27,28,28 ,29-35,36,36 ,37-42
2403300001000020001
43,43 ,44-49,50,50 ,51-56,(57-67),69 
2403300001000020002
2403300001000030001
2403300001000040001
2403300001000050001
1-42,43,43 ,44-73,(74-90)
2403300001000060001
1,1 ,1¡,2-18
2403300001100010001
663971
04247814001
2403300001100020001
3-38,41,47
2403300001100030001
2403300001100050001
1-5,6,6 ,7-12,13,13 ,13¡,14,15,15 ,15¡
2403300001100060001
16-19
2403300001100060002
1-14,20,23,32,34
2403300001100070001
2403300001100080001
2403300001100090001
1,2,2 ,3-7,(8-34)
2403300001100100001
2403300001100110001
1,1 ,2,2 ,3-9,(10-60)
2403300001100120001
2403300001200010001
663953
04247834002
2403300001200020001
1-7,9-12
2403300001200030001
1,1 ,1¡,2-12,16
2403300001200040001
2403300001300010001
663951
04247822002
2403300001300020001
1,2,2 ,3-12,13,13 ,14-47
2403300001400010001
04247830003
2403300001400050001
1,1 ,1¡,1¢,2,2 ,2¡,3-18
2403300001400040001
1-9,10,10 ,11-15,16,16 ,17-27
2403300001500010001
04247802003
1-13,14,14 ,15,16,18,18 ,19,20,22
2403300001500020001
1-10,(12-30)
2403300001500030001
2403300001500040001
2403300001700010001
663973
04247819001
1,1 ,2,3,3 ,4-15
2403300001700020001
1-10,11,11 ,12-23,24,24 ,25-39,40,40 
2403300001700030001
41-48,49,49 ,50,51,51 ,52-67
2403300001700030002
1-12,19
2403300001700040001
2403300001700050001
(1-19),21,21 
2403300001700060001
1,1 ,2,2 ,3-29
2403300001800020001
04247806004
2403300001800040001
1-21,22,22 
2403300001800050001
2403300001900010001
04247806003
2403300001900020001
2403300001900030001
1-9,(10-18)
2403300001900040001
1-13,28
2403300002000010001
04247822001
2403300002000020001
1-4,(5-13)
2403300002000030001
2403300002000040001
2403300002000050001
2403300002000060001
2403300002000070001
1,1 ,2-11,12,12 ,13-30
2403300002000080001
1,2,2 ,3-38
2403300002000100001
1-19,20,20 ,21,23,25
2403300002000120001
1-10,13,15,17
2403300002000130001
1,2,4,4 ,5,9,10,12,13,14
2403300002100010001
04247830006
2403300002100040001
1,1 ,2-5,6,6 ,7-55
2403300002100030001
1,1 ,2-23,(24-32)
2403300002200010001
04247802005
1-36,37,37 ,37¡,38-41,(42-46)
2403300002200040001
1,1 ,2,3,6,7,8,10,12
2403300002200030001
2403300002200020001
2403300002300010001
04247824001
1-4,14
2403300002300020001
2403300002300030001
1,2,2 ,2¡,2¢,2£,2¤,3-6,15
2403300002300040001
1,1 ,2-34,41,43,45
2403300002300050001
2403300002300060001
2403300002300070001
1-18,27
2403300002300090001
2403300002300100001
1-4,5,5 ,5¡,6-15,16,16 ,18-21,56
2403300002500040001
04247806005
1-2,3,3 ,4,6
2403300002500050001
2,3,5,7,13,13 ,15,19,19 ,20
2403300002500060001
2403300002500070001
1,2,2 ,3-7,8,8 ,9-30,31,31 
2403300002600010001
04247825001
1-8,9,9 ,9¡
2403300002600040001
1,1 ,2-18
2403300002600050001
1,1 ,2,2 ,3,4
2403300002600060001
1-18,19,19 ,20 ,22 
2403300002700010001
663952
04247830001
1,2,6,6 ,11-20,24,30,36,38
2403300002700020001
1,1 ,2,3,3 ,3¡,4,4 ,4¡,5,5 ,5¡,(6-25)
2403300002700030001
26,26 ,27-53,54,54 ,55-60
2403300002700030002
2403300002700040001
1,1 ,2-17
2403300002700050001
1-3,4,4 ,5-11
2403300002700060001
2403300002700070001
2403300002700080001
2403300002700090001
1-3,8,11-13,28,34,38,44
2403300002700100001
1-19,20,20 ,21-39,40,40 
2403300002700110001
2,7,13,17-94
2403300002700120001
1,2,2 ,3-13,15,16,17,17 ,19,21,29,36,39
2403300002700130001
39 ,41
2403300002700130002
1-4,5,5 ,7-76,77,77 ,77¡,(79-109)
2403300002700140001
2403300002700150001
1-9,13,13 ,17,17 ,17¡,19-23,24,24 
2403300002700160001
25-53,54,54 ,60
2403300002700160002
1,4,6-8,9,9 ,10,11,11 ,12-40
2403300002700180001
1,2,4,5,5 ,6-8,10-12,15,17
2403300002700190001
2403300002700200001
1,1 ,2,2 ,3-10,(11-21)
2403300002700210001
1-19,20,20 ,21-39,40,40 ,41-50
2403300002700220001
1-6,7,7 ,8-19,20,20 ,21-38,39,39 ,40,41
2403300002700230001
2403300002700230002
2403300002700240001
2403300002700250001
2403300002700270001
1,1 ,6
2403300002700260001
1,2,2 ,2¡,3-7,8,8 ,9-23,38,52
2403300002800020001
04247802004
1,1 ,2,2 ,3-26,28,29
2403300002800030001
1-29,30,30 ,31-36,37,37 ,38-84
2403300002800040001
2-8,9,9 ,10-13
2403300002900010001
04247834001
2403300002900020001
(1-7),9,9 ,9¡,(11-35)
2403300002900040001
1,1 ,2,2 ,3,4,4 ,5-14,15,15 ,16-23
2403300002900050001
2403300002900060001
2403300002900070001
1,1 ,(3-15),18,25,31
2403300002900080001
2,4,4 ,4¡,(6-18),20,20 ,(22-28)
2403300002900090001
1-12,13,13 ,14-22,23,23 ,24-45,46,46 
2403300002900100001
2403300002900100002
1,3-8
2403300002900110001
2,4,(45-79)
2403300002900120001
2403300002900140001
2,2 ,(4-20)
2403300002900160001
33,41
2403300002900180001
2403300002900190001
1-48,(49-63)
2403300002900210001
1-3,5-8,10,12,14
2403300002900220001
1,1 ,2-7,9-22,24,27-30,31,31 
2403300002900230001
1-10,11,11 ,12-49
2403300002900240001
2403300002900250001
1-12,13,13 ,17,17 ,18-58
2403300002900260001
1,2,2 ,(3-23),27,28,30,31
2403300002900270001
2403300002900290001
1,1 ,1¡,1¢,1£,2,3,4,4 ,5,6,6 
2403300002900300001
2403300002900310001
(3-27),28,29,31,37
2403300002900330001
3,3 ,4-7,9,11
2403300002900350001
2403300002900360001
2403300003000010001
04247834003
2403300003100010001
04247834004
2403300003100020001
2403300003100030001
2403300003100040001
2403300003200010001
663972
04247837001
1-19,34
2403300003200020001
2403300003200030001
1,2,2 ,3-16,18
2403300003200040001
1-43,44,44 ,45,46,47,47 ,48-53
2403300003200050001
1-14,15,15 ,16-24,(25-41)
2403300003200070001
1-8,(9-61)
2403300003200080001
1-11,(12-30),32,32 ,(34-44)
2403300003200090001
1-49,(51-65)
2403300003200110001
1-20,21,21 ,22,22 ,23-42
2403300003200120001
1-11,12,12 ,14,16,18
2403300003200140001
1,2,2 ,3-49,50,50 ,51-114
2403300003200150001
1-31,32,32 ,(33-39)
2403300003300010001
663970
04247840001
2403300003300020001
1-7,8,8 ,9-24,25,25 ,26-29
2403300003300030001
1-5,(6-12)
2403300003300050001
2403300003300060001
2403300003300070001
1,1 ,1¡,2-9,10,10 ,11-23,(24-30)
2403300003300080001
1,1 ,2
2403300003300100001
2,4,6,7,7 ,8-10,11,11 ,11¡,12-34
2403300003300110001
2403300003300110002
1,1 ,2-13,27
2403300003300130001
1,1 ,2-13
2403300003300140001
1,2,2 ,3-21,(26-38)
2403300003300170001
1-33,(34-50)
2403300003300180001
2403300003300200001
2403300003300210001
2403300003300220001
1,2,4,5,5 ,6-12,15,17
2403300003300230001
1-17,(18-30)
2403300003300240001
2403300003300250001
(1-21),8,20
2403300003300260001
1-62,63,63 ,64-77,(82-106)
2403300003300280001
2403300003300300001
2403300003300340001
1,1 ,1¡,2-13
2403300003300350001
1,1 ,1¡,2,2 ,3-8
2403300003300360001
1,1 ,2-4,5,5 ,6-10
2403300003300370001
1,1 ,1¡,2-11,12,12 ,13,14,15,15 ,16-20
2403300003500030001
04247560000
2403300003500030002
1-27,28,28 ,29-40
2403300003500060001
1,1 ,2,2 ,3,4,4 ,5-9
2403300003500070001
1-20,23-30,31,31 ,35,37
2403300003500090001
1,1 ,1¡,1¢,2-8
2403300003500110001
1-4,5,7,8,(9-15),24
2403300003500120001
1-11,13,14,16
2403300003500140001
2403300003500150001
1-35,36,36 ,38,40
2403300003500160001
1,1 ,2,2 ,2¡,2¢,3-18
2403300003500170001
2403300003500190001
1,2,2 ,3-31,33,37
2403300003500210001
1-4,9,10,12,14,15
2403300003500220001
1-25,26,26 ,28
2403300003500230001
2403300003500240001
2403300003500260001
2403300003500280001
2403300003500300001
1,1 ,2-28
2403300003500310001
2403300003500320001
2403300003500330001
2403300003500350001
2,2 ,4,6,6 ,6¡,6¢
2403300003500360001
2403300003500370001
2403300003600010001
04247814003
1,1 ,2-4,5,5 ,6-8,9,9 
2403300003600020001
(1-17),18,19,21
2403300003600030001
1,1 ,2-16,17,17 
2403300003600040001
1-12,13,13 ,14,(15-23)
2403300003700010001
04247814004
2403300003700020001
1-10,18
2403300003700030001
1,9,10,14,16,32
2403300003800010001
04247806006
2,3,5-63
2403300003900010001
04247830004
2403300004000040001
04247834006
2403300004000050001
2403300004000060001
1-5,(9-21)
2403300004000070001
2403300004100030001
04247840002
1-6,7,7 ,8-11,(12-38),59
2403300004100040001
2403300004200010001
04247824003
1-6,7,7 ,8-38
2403300004300010001
04247806007
1-5,34
2403300004300020001
2403300004500010001
663957
04247849001
1-3,4,4 ,5-9,11,13
2403300004500020001
1-86,88,90
2403300004500030001
1,2,(3-13)
2403300004500040001
1-3,(4-24)
2403300004500050001
1-31,(32-37),38,38 
2403300004500060001
1,1 ,2-75
2403300004500070001
1-9,11,13,22,29
2403300004500080001
1-6,7,7 ,8-11,(12-18)
2403300004500100001
2403300004500110001
2403300004500150001
1-3,4,4 ,5-17
2403300004500170001
1 ,1¡,2-17
2403300004500180001
1-4,5,5 ,6-12
2403300004500190001
2403300004600010001
04247822004
2403300004600020001
1,2,2 ,3-6,7,7 ,8-12,13,13 ,14-28,29,29 
2403300004700010001
04247560001
30-66
2403300004700010002
1-30,31,31 ,32,33,33 ,34-66
2403300004700020001
2403300004700030001
2403300004800010001
04247822003
2403300004900010001
04247814005
1-9,10,10 ,11-44,(45-69)
2403300004900020001
2403300004900030001
2403300005300020001
663974
04247555000
2403300005300030001
3,7,9-17,19,21,21 
2403300005300040001
(7-23),24-29,(30-44)
2403300005300050001
2403300005300070001
4,8,14,16,19,26-36,37,37 ,38-56
2403300005300080001
2403300005300090001
2-14,15,15 ,16,18,18 ,20,21,21 21¡,22
2403300005300100001
8,19,34,37,40,44,46,47,50-113
2403300005300110001
2,4,(5-11),14,25
2403300005300130001
2403300005300140001
3-29,36,42,66,68,78,(80-95),96,96 
2403300005300150001
24,25,36,40,49,52,54,56,(70-76),77,79
2403300005300160001
82,83,90,92,93,100-119,120,120 ,122,124
2403300005300160002
2403300005300160003
2403300005300170001
2,6-8,13,15,21,(20-30),31-39
2403300005300180001
(3-7),8,11-16
2403300005300190001
2403300005300200001
(1-7),9,9 ,(11-27)
2403300005300210001
1,1 ,2,3,3 ,4,5,5 ,6,7,7 ,8-19,(20-32)
2403300005300220001
2403300005300230001
5,7,14,33,35,43,47,49,51,53
2403300005300240001
2403300005300250001
(1-5),6,7,9,16
2403300005300260001
3-4,5,5 ,10,12-15
2403300005300270001
1-10,12,14,15-18,20,20 ,22,24
2403300005300280001
1,2-12,15,17-20,21
2403300005300290001
1,3,4,6-17,(19-38)
2403300005300300001
2403300005300310001
2403300005300320001
2403300005300330001
7,8,10,11,15,17,18,(22-32)
2403300005300340001
1-14,18
2403300005300060001
1,1 ,4,4 ,6,8,10
2403300005400010001
663977
04247565000
2403300005400020001
1 ,1,2-5,6,6 ,6¡,7-26
2403300005400030001
1-7,11
2403300005400040001
2403300005400070001
2403300005400080001
1-12,14,16-21,22,22 ,23,23 ,(24-28),30
2403300005400100001
2403300005400100002
1-25,(26-34),35,54,56
2403300005400110001
2403300005400120001
2403300005400130001
1,(2-10),11,12
2403300005400140001
2 ,2,3,3 ,4,6,8,8 ,(10-24)
2403300005400150001
2,2 ,2¡,4-25,30,33
2403300005400160001
1-5,6,6 ,7-17
2403300005400170001
1-5,6,6 ,7,9,9 ,20-30
2403300005400180001
1-30,31 ,36
2403300005400190001
1,2,2 ,3-58,59,59 
2403300005400200001
(2-8),24
2403300005400220001
1-5,6,6 ,7-13,15,16,16 ,17,19,20-41
2403300005400230001
1-6,7,7 ,8-15,16,16 ,18,18 ,18¡,19-55
2403300005400250001
2403300005400250002
2 ,2¡,(4-20)
2403300005400260001
2403300005200010001
04247819002
2403300005000010001
04247849002
2403300005100010001
04247849003
(1-13),(17-23),27,(31-35),(30-32),62
2400000400000290001
(3-7),(4-8)
2400000400000340001
(3-15),(6-16)
2400000400000010001
2400000400000080001
(3-45),(26-48)
2400000400000150001
2400000400000170001
3,7,4,8
2400000400000180001
2400000400000210004
(3-23),(4-32)
2400000400000230001
(3-29),(34-36)
2400000400000240001
2400000400000250001
(1-45),(49-55)
2400000400000040001
2400000400000050001
(3-13),(17-35),(4-16)
2400000400000190001
(20-26),(30-34)
2400000400000190002
(1-5),11,13
2400000400000200001
(3-5),9,(8-20)
2400000400000220001
2400000400000260001
1,(4-10)
2400000400000280001
3,5,(11-17),21,23,(2-20),24,26
2400000400000590001
662977
3,9,15,17,27,29,(2-4)
2400000400000830001
(13-17),21,27,29,(14-22),26
2400000400000550001
(5-9),(13-29),33,24,26,32,34,40,42,44
2400000400000680001
(1-27),(2-12),32
2400000400000620001
11,(4-10),16,22,24,30
2400000400000610001
(1-9),31,(2-16),24,26
2400000400000640001
(1-11),25,27,(2-6),10,10 ,16,20,20¡
2400000400000720001
22,26,28
2400000400000720002
(1-13),(17-21),25,29,31,(1-12)
2400000400000780001
2400000400000780002
2400000400000480001
7,9,15,17,(4-10),32/1,32/2
2400000400000670001
(1-5),13,4
2400000400000560001
2400000400000360003
2400000400000840001
(1-3),(7-23)
2400000400900010001
662991
(1-5),(9-15),(8-16),2
2400000400900040001
(5-9),(13-17),6,8,14,20
2400000400900020001
(5-13),(17-25),(6-22)
2400000400900050001
2,3,4,6,8,12,14,15
2400000400900030001
5,7,(13-27),(12-16)
2400000400900060001
2400000400900090001
(1-29),(2-12),18,20,20 ,(26-32)
2400000400600080001
662974
2400000400600010001
2,4,6,3,5
2400000400600020001
5,(21-27),4,6,14,16,20,22,26,30,48
2400000400600050001
2,12,7,9,40
2400000400600110001
48,50,52,54,18
2400000400600100001
(1-19),8
2400000400600030001
2,2,3,7
2400000400600060001
2400000400700020001
662975
(1-19),(2-16),26
2400000400700050001
2400000400700040001
(1-17),(2-26),36
2400000400700030001
(3-19),(23-31),(37-47),(51-63)
2400000400700070001
(2-22),(28-44),(48-58)
2400000400700070002
(1-15),(19-51),(2-18),(48-54)
2400000400700060001
22,26,28,32,34,44
2400000400700060002
2400000400700100001
662979
2400000401000120001
2400000401000110001
2400000401000040001
2400000401000010001
2400000401000090001
(6-24),(46-76),(1-75)
2400000401000070001
2400000401000030001
(43-71),(2-78)
2400000401000020001
2400000401000050001
(10-48),(17-35)
2400000401000060001
(1-17),21,(4-12)
2400000401000080001
2400000400000450001
662973
(2-8),(5-9)
2400000400000600001
2400000400000630001
(1-9),13,21,21,23,25,12,18,20
2400000400000760001
(4-12),(16-22)
2400000400000470001
17,19,(18-32)
2400000400000570001
(25-39),(45-49),(26-30),(63-67)
2400000400000700001
54,58,60
2400000400000700002
(8-14),(44-52),26,30,34,36,38
2400000400000490001
(1-9),(21-27),(33-43),(47-51)
2400000400000490002
4,7,30
2400000400000730001
2400000400000660001
2400000400000440001
1,1,2,15,13,11,30,27,21
2400000400000790001
(5-15),(2-16),35
2400000400000810001
(2-14),(3-13),36,37,41,43,45
2400000400000800001
1,(5-11),(31-43),23,25,(2-6),(32-36)
2400000400000530001
(1-49),(63-69),74,(2-26),(34-48)
2400000400000740001
64,68,70
2400000400000740002
(16-26),(32-42),(15-25),(31-41)
2400000400000650001
8,9,10
2400000400000650002
(15-37),(16-26),(34-42)
2400000400000820001
(5-29),(6-28)
2400000401100050001
(1-107),(2-106)
2400000401100010001
(5-15),(6-14)
2400000401100020001
(5-25),(4-24)
2400000401100030001
2400000401100040001
(2-18),(3-19)
2400000401100090001
15 ,19,25
2400000800000040001
(4-8),(14-16),17
2400000800000040002
2400001800000010001
662203
2400001800002090001
2400001800000030001
2 ,3 ,7,7 ,9 ,12 
2400001800000040008
83 ,87¢,95,104
2400001800000040009
25,40
2400001800000040010
2,14,(1-27)
2400001800000050001
2,13,14,15,16,17,17 ,18,18 ,19
2400001800000060002
2400001800000070001
2400001800000080001
2400001800000090001
2400001800000100001
1,1 ,(8-18),(9-17)
2400001800000120001
(26-36),(27-37)
2400001800000130001
2400001800000150001
(8-18),(9-17)
2400001800000140001
2400001800002060001
2400001800000160001
2400001800000170001
2400001800000180001
2400001800000190001
2400001800000200001
1,3,(2-8)
2400001800000210001
1 ,1£,7,9¡,52,(2-12)
2400001800000220001
2400001800000230001
1,2,2 ,3,6
2400001800001780001
2400001800000240001
2400001800000250001
(1-167),(2-168)
2400001800000260001
1,2,3,5,7,9,10,11,11/17,11/18,12,13,14
2400001800000270001
2400001800000280001
8,(7-15)
2400001800000290001
2400001800000300001
(1-15),21/1,21/2
2400001800000310001
2400001800000320001
2400001800000330001
2400001800000340001
662204
2400001800000350001
2400001800000360001
(1-25),2,4,8 ,29,(12-18)
2400001800000370001
(2-28),(3-7)
2400001800000380001
2400001800000390001
2400001800000400001
(42-126),(43-127)
2400001800000410001
2400001800000420001
(1-79),(2-14)
2400001800000430001
2400001800000440001
2400001800000450001
2400001800000460001
(1-77),(2-76)
2400001800000480001
2400001800000490001
2400001800000500001
2400001800000510001
2400001800000520001
12,13,15/1,15/2,27/2,29,31,33,35
2400001800000530002
4/3
2400001800000540002
2400001800000550001
2400001800000560001
(18-30),23,25,31,33,34,36,36 
2400001800000570001
(44-56),62
2400001800000570002
2400001800000580001
(3-9),(6-14)
2400001800001830001
(21-31),(20-32),36
2400001800001830002
(1-65),(2-64)
2400001800000590001
2400001800000600001
38 ,(1-121)
2400001800001700001
2400001800000610001
(1-81),(2-94)
2400001800000620001
(1-17),6,10,18,18 ,20,24,28,30
2400001800001850001
1,1 ,3,5,9
2400001800000630001
2400001800000650001
(1-7),12,13,14,15,(4-8)
2400001800000680001
2400001800000660001
2400001800000670001
2400001800000690001
2400001800000700001
1,1 ,1¡,1¢,(2-10)
2400001800001840001
2,6,(1-15)
2400001800000710001
2400001800000720001
2400001800000730001
(1-79),2,4,(30-60)
2400001800000740001
2,(3-23),(16-20),29,31,33,35,47,51
2400001800000750001
1/3,3,4 ,6,6 
2400001800000760001
2400001800000770001
2400001800000780001
2400001800000790001
2400001800000800001
2400001800000810001
2400001800000820002
3/1,3/2,5/1,5/2,6/1,6/2,6 ,3 /1,3 /2
2400001800000830001
4,7,9,11
2400001800000830002
2400001800000860001
(1-133),(2-110)
2400001800000870001
3,5,(4-12)
2400001800000880001
2400001800000890001
2400001800000900001
2400001800000910001
15,22
2400001800000920002
2400001800000930001
2400001800000940001
(1-45),(8-16)
2400001800000990001
2,11,12,14,45
2400001800001000001
2400001800001010001
3,(2-12)
2400001800001030001
2400001800001040001
(3-17),2,(10-16)
2400001800000960001
2400001800000970001
2400001800001050001
2400001800001060001
2400001800000980001
2400001800001070001
2400001800001080001
2,3,6,8
2400001800001090002
2400001800001100001
2400001800001110001
2400001800001120001
(4-46),(9-27)
2400001800001130001
2400001800001140001
1,3,(2-38),(9-15)
2400001800001150001
2400001800001160001
2400001800001170001
2400001800001190001
(1-17),(2-26),32,34
2400001800001210001
2400001800001220001
(1-71),(2-52)
2400001800001230001
(1-47),(2-68)
2400001800001240001
2400001800001250001
2400001800001260001
26,28,30,32
2400001800001270002
2400001800001280001
2400001800001290002
2-76
2400001800001300001
2,(1-9)
2400001800001310001
2400001800002050001
2400001800001330001
2400001800001340003
2400001800001340004
(38-92),(43-125)
2400001800001860001
2400001800001350001
2400001800001360001
1,(2-26),32,34
2400001800001380001
2400001800001390001
2400001800001400001
2400001800001880001
2400001800001970001
2400001800001410001
2400001800001430001
(4-16),1,5,7,17,19,20,27
2400001800001890001
2400001800001440001
2400001800001450001
2400001800001470001
(1-7),2,4
2400001800001480001
2400001800001490001
2400001800001500001
1-8,11,13,14,16,22,26,32,34,36
2400001800001510001
2400001800001520001
2400001800001530001
2400001800001540001
(1-13),(2-42)
2400001800001990001
(1-15),(2-44)
2400001800001550001
2400001800001560001
2400001800002080001
2400001800001580001
(2-8),(12-20)
2400001800001900001
2400001800001590001
1,2,4-16,20,21,24,25,26,29,31
2400001800001920001
2400001800001940001
2400001800001930001
2400001800001800001
2400001800001950001
2400001800001600001
2400001800001610001
2400001800001620001
2400001800001630001
(1-47),(2-14)
2400001800001640001
2400001800002070001
2400001800001650001
2,4,5,6,10,13-18,20,21,23,24
2400001800001960001
2400001800001660001
(2-8),5,7
2400001800001670001
1-31,76,78
2400001800001690001
2400001800001710001
2400001800001720003
2400001800001730001
2400001800001740001
2400001800001750001
2400001800001760001
2400001800002040001
(1-5),4,4 
2400000900000340001
2,4,6,14,16,18,19,20,22,24,25-30
2400000900000440001
663332
(3-17),(2-8)
2400000900000040001
663318
9,(19-45),(10-38)
2400000900000040002
663319
2400000900000030001
2400000900000030002
(13-23),24,28
2400000900000050001
2¡,4¤,28
2400000900000370001
2400000900000390001
663316
2400000900000060001
3,3 ,5,6,7,7¡
2400000900000070001
2400000900000080001
2,4,6,7,7 ,13
2400000900000410001
2400000900000420001
2400000900000090001
2400000900000090002
(1-45),(12-48)
2400000900000100001
2400000900000100002
(47-49),(50-52)
2400000900000100003
2400000900000110001
(3-21),6
2400000900000110002
1,3,4,5,6,6 ,7,8
2400000900000120001
(23-43),42
2400000900000130001
(47-93),(44-76)
2400000900000130002
2400000900000140001
(11-23),(10-22),9 
2400000900000140002
2400000900000140003
2400000900000010001
(9-43),(18-40)
2400000900000010002
(45-47),(42-48)
2400000900000010003
2400000900000160001
2400000900000210001
2400000900000210002
2400000900000210003
2400000900000180001
2400000900000180002
2,6,8,8 
2400000900000190001
(15-29)
2400000900000200001
2400000900000200002
(4-8),(1-3),(7-9),(13-31)
2400000900000170001
(1-5),9,15,23,29,33,(37-45),49,53
2400000900000220001
2400000900000230001
(40-118),(67-121)
2400000900000230002
(2-10),1,1¡,3,3 ,11,13,19
2400000900000240001
(12-22),7,9,17,21
2400000900000240002
3,4,7,11,13,17,19,21,31,46
2400000900000330001
663321
2,6,6 ,6¡,6¢,13 ,14,14 ,15,19 ,19¡,19£
2400000900000430001
21,23,24,25,26 ,31,34,37,55 
2400000900000430002
8,11,12
2400000900000260001
1,2,4,5,6/4,7 ,7¡,7/10,8/3,9,10 ,13
2400000900000270001
1,3 ,4,6,8,8 ,14,16
2400000900000280001
1,2,3,3 ,4,5,6,6 ,7,7 ,8,10,10 ,11,13
2400000900000290001
(1-41),(6-36)
2400000900000300001
(43-83),(38-78)
2400000900000300002
2400000900000310001
45,61
2400000900000310002
1 ,2,7,7 ,14
2400000900000320001
(4-8),(12-16),20,22,(30-38),(42-52)
2400000900000350001
2400000900000350002
(3-11),4,14,15,17
2400000900000450001
663330
(5-11),4,6,10
2400000900000620001
1,3,(7-21)
2400000900000460001
(1-11),2,(6-12),15,16,18,22,28,30
2400000900000470001
663333
(4-14),(18-22),28,(38-60)
2400000900000600001
2400000900000630001
3-19,23,27,27 ,29,31,31 ,33,35,37,41
2400000900000480001
2400000900000490001
2,3,3 ,4,6,10,12,16
2400000900000500001
1,3,5,9,10,12,13,15,19
2400000900000570001
2400000900000520001
2400000900000530001
(2-8),1,7,9
2400000900000510001
2400000900000640001
1,(7-13),17,19,19 ,23,25,29,35,39
2400000900000540001
2400000900000540002
4,6,10 ,12
2400000900000610001
5,(11-15),19,21,(27-37)
2400000900000550001
1,3,(4-14),7,13,15,18,22,26,26 ,28
2400000900000560001
1,3,6,8,12
2400000900000580001
14,15,16,17,19,21,23,25
2400000900000580002
1¡,2
2400000900000580003
1,1 ,7,11,13
2400000900000590001
1,1 ,1¡,1¢,1£,2,2 ,2¡,2¢,2£,8,10,15,17
2400000900000670001
663340
18,19,20,22,24,24 ,26
2400000900000670002
(2-16),(20-26)
2400000900000660001
2,5,7-9,12-20,26,28,30,34,36,38,40
2400000900000680001
40 ,42,46,50,52,56
2400000900000680002
1,3,7,9,11,15
2400000900000720001
(1-7),2 ,2¢,2£,(6-26),11,13,13 ,17
2400000900000690001
4,5,6,9,9 ,9¡,9¢,11,11 ,11¡,(12-18)
2400000900000700001
2400000900000700002
(1-5),2,6,9,10,12,17,19
2400000900000710001
2400000900000750001
2400000900200030001
663335
04429557000
2400000900200050001
2400000900200020001
5,6,8,9,11
2400000900200010001
1,1 ,2,3,4,5,6,10,12,14,15
2400000900200040001
2400000100000070001
2400000100005730001
2400000100005740001
2400000100000150001
2400000100000370001
2400000100000400001
2400000100009140001
2400000100000580001
2400000100000580002
2400000100000980001
2400000100001090001
2400000100001780001
2400000100001980001
2400000100011120001
2400000100002350001
3,5,6,7,8
2400000100002880001
2400000100010990001
2400000100003190001
2400000100003210001
2400000100011000001
15,17,19,21,23
2400000100011020001
2400000100004220001
2400000100000200001
2400000100010360001
2400000100008560003
2400000100000330001
2400000100011310001
2400000100011430001
2400000100011600001
2400000100000510001
2400000100008980001
2400000100011030001
2400000100011180001
2400000100100010001
04401374001
2400000100011590001
2400000100010330001
2400000100011200001
2400000100001680001
2400000100011260001
2400000100001860001
2400000100500010001
2400000100011410001
2400000100010980001
2400000100011250001
2400000100011580001
2400000100011570001
2400000100011480001
2400000100006360001
2400000100004370001
2400000100004550001
2400000100011520001
2400000100004740001
2400000100004750001
2400000100004780001
2400000100005080001
2400000100011560001
2400000100005170001
3,15,39
2400000100005410001
2400000100005440001
2400000100009150001
2400000100005590001
2400000100009260001
2400000100005800001
2400000100011360001
2400000100011390001
2400000100011050001
2400000100011460001
2400000100011170001
2400000100011500001
2400000100011450001
2400000100011490001
2400000100006470001
(5-79),4
2400000100006480001
(7-23),(2-14)
2400000100008590001
3,15,30,34
2400000100011010001
2400000100006590001
2400000100003650001
2400000100011540001
2400000100006730001
2400000100006740001
2400000100006750001
2400000100006760001
2400000100011440001
2400000100006930001
1,229
2400000100000410001
2400000100011400001
2400000100007270001
2,3,4,8,44
2400000100009160001
2400000100011270001
1,4,6,14
2400000100007470001
(2-38),11
2400000100007690001
2400000100011190001
2400000100011470001
2400000100007790001
2,12,14
2400000100011070001
5,33
2400000100007920001
2400000100011530001
2400000100011510001
8,34,37,43
2400000100008250001
2400000100008290001
660127
2400000100011350001
2400000100011610001
2400000100011340001
2400000100008550001
2400000100008480001
2400000100010110001
2400000100000620001
2400000100001930001
1,16,32
2400000100002030001
1,3£,5,7,13,15,40,46,50
2400000100004580001
17,19,27,29,31,58,60,62,64,66,68
2400000100004580002
2400000100006100001
2400000100011420001
2400000100006700001
2400000100006880001
2400000100008500001
2400000100008510001
2400000100400090001
2400000100400070001
2400000100400080001
2400000100400010001
2400000100400060001
2400000100400020001
3,5,6,24,26,40
2400000100400100001
4,7,16,19
2400000100400050001
2400000100400040001
6,30,43,55,61
2400000100400110001
1,7
2400000100400030001
2400000100100020001
2400000100100050001
2400000100100030001
2400000100100060001
2400000100100040001
2400000100006830001
2401900001200050001
663633
04221816001
1-73,75
2401900001200010001
1-41,43
2401900001200040001
(2-58),(1-51)
2401900001200020001
24,(1-23)
2401900001200100001
2401900001200070001
2401900001200110001
(1-21),(2-4),8
2401900001200030001
2401900003600020001
04221816003
2401900003600010001
2401900003600030001
2401900001600030001
04221816002
2401900001600040001
2401900001600010001
2401900001600020001
(1-21),(25-49)
2401900005600230001
663630
04221840001
(2-10),(16-32)
2401900005600230002
2401900005600020001
2401900005600050001
2401900005600110001
2401900005600190001
2401900005600210001
2401900005600130001
2401900005600090001
2401900005600080001
2401900005600120001
2401900005600170001
2401900005600280001
2401900005600060001
2401900005600200001
2401900005600290001
(2-24),(1-7)
2401900005600150001
(2-4),(1-3),7
2401900005600030001
(2-6),(12-48)
2401900005600240001
2401900005600240002
2401900005600070001
(1-47),(51-93)
2401900005600070002
(2-8),(1-21),25
2401900005600100001
2401900005600040001
2401900005600260001
2401900005600140001
2401900001700030001
04221840002
(2-16),(1-35)
2401900001700010001
2401900001700080001
2401900001700040001
2401900001700020001
2401900001700070001
2401900002200020001
04221840003
2401900002200010001
2401900002200030001
2401900002200040001
(2-76),(1-73)
2401900003500010001
663609
04221840005
2401900003500030001
2401900003500060001
2401900003500070001
2401900003500090001
2401100001700120001
663716
04213831001
2401100001700080001
2401100001700010001
2401100001700020001
2401100001700050001
2401100001700070001
2401100001700090001
2401100001700040001
2401100001700100001
2401100001700130001
(1-25),2
2401100001700110001
2401100001700060001
(1-19),2
2401100001700030001
2401100002000010001
663719
04213831002
2401100002000020001
2401100002000030001
2401100003700010001
663717
04213831005
2401100003700020001
(2-42),(1-15)
2401100004000010001
04213831004
2401100004000020001
2401100004000030001
2401100004000040001
2401100003600010001
04213831003
2401100003600020001
2401100003600030001
2401100003600040001
2401100003600050001
2401100003600060001
2401100003600070001
2401900000800090001
663624
04221810001
2401900000800100001
2401900000800020001
2401900000800110001
2401900000800120001
2401900000800150001
(2-6),(1-11),15
2401900000800010001
2401900000800130001
2401900000800080001
2401900000800140001
2401900000800030001
2401900000800170001
(2-34),(1-23)
2401900000800040001
2401900000800160001
2401900000800060001
2401900003100020001
04221810003
2401900003100040001
(2-16),(1-5)
2401900003100030001
2401900001400010001
04221810002
2401900001400020001
2401900001400030001
2401900003000010001
04221810004
2401900003000020001
2401900003000030001
(2-34),(1-25)
2401900003000040001
2401900004500010001
663626
04221813003
2401900004500020001
(1-84),(2-62),86
2401900000600020001
663625
04221813002
2401900000600070001
2401900000600050001
(2-54),(1-57)
2401900000600060001
(2-16),(1-7),13
2401900000600030001
2401900000600040001
2401900000600010001
2401900000600080001
2401900000900030001
663631
04221813001
(2-76),(1-85)
2401900000900240001
2401900000900040001
2401900000900060001
2401900000900210001
2401900000900150001
(10-42),(1-89)
2401900000900080001
2401900000900130001
(2-42),(1-53)
2401900000900160001
2401900000900170001
2401900000900110001
2401900000900020001
2401900000900190001
2401900000900200001
2401900000900010001
2401900000900260001
2401900000900220001
2401900000900270001
2400001600003670001
663600
2400001600004770001
663610
2400001600001120001
2400001600004730001
1-13,15,18,27,28
2400001600004600001
2400001600001390001
663612
1-6,111,117,230,236,242,246
2400001600003980001
2400001600004790001
2400001600001260001
2400001600003570001
9,10,12,13,15,16,18
2400001600001710001
16-18,29-31,2,3,20,33,33,36
2400001600000060001
2400001600004000001
1-11,15,16
2400001600004560001
9-13,1,6,7,15,16,18,19
2400001600001750001
13,13,14
2400001600001690001
1-15,17,20-27
2400001600001700001
24-26,29-35,37-46,48-50
2400001600001740001
20,52,53,55,64/1,64/2
2400001600001740002
1-3,22-24,5,18,18/1,19,31,33,38
2400001600004310001
1-25,55
2400001600001520001
663615
1,3,6,11,26,27,37-46,48,50
2400001600004160001
60-65,67-76,98-100,86,90,91,94
2400001600004160002
149-157,116,127,181,194
2400001600004160003
1-35,38,39,41-45,50,52-54,56-61
2400001600001720001
87-101,104-106,111,115,116,120-123,127
2400001600001720002
129-135,140-145,148-150,137,152,154,156
2400001600001720003
157,159,160
2400001600001720004
2400001600003250001
1-26,28-30,33,35-38,43,44,49
2400001600004720001
50-53
2400001600004720002
2400001600003480001
2400001600002170001
663602
2400001600002280001
2400001600004200001
2400001600000580001
2400001600002130001
2400001600004120001
1-5,7,8
2400001600002180001
2-5,7,8,10,10,14
2400001600003350001
2400001600002290001
2400001600004210001
2400001600001990001
2400001600000640001
2400001600003360001
(3-9),(4-16),21,23,28
2400001600002510001
2400001600004670001
2400001600003310001
2400001600004130001
2400001600002300001
2400001600000650001
2400001600000650002
2400001600004680001
2400001600003320001
2400001600003490001
2-8,10,15
2400001600002310001
2400001600003330001
2400001600004300001
2400001600003290001
2400001600001370001
(1-7),(8-10)
2400001600004030001
2-5,7,8,10-15,(18-24),25,27,28
2400001600002070001
30-33,35-37,41-47,49-66
2400001600002070002
68,70,72,74,78,80
2400001600002070003
2400001600002140001
2400001600002190001
2400001600003630001
(1-9),4,10,41,12-17,19-32,34-39
2400001600002080001
1-11,17-24,15,26
2400001600002090001
2400001600002200001
2400001600004700001
2400001600003590001
2400001600004420001
(2-6),(1-7),(18-26)
2400001600003830001
(2-12),1,1/3
2400001600001070001
6,8,9,11
2400001600003460001
2400001600002210001
2400001600002220001
(2-10),(7-17)
2400001600002230001
(2-12),(1-21),25,27
2400001600000530001
2,3,7,9,10
2400001600002240001
(1-7),(8-14),2
2400001600002250001
13-20,22-29,31-33,10,11
2400001600000860001
(1-25),8
2400001600000500001
2400001600002260001
(11-35),(20-22),26,5-8,10
2400001600002270001
23-47,52-54,57-59,21,49,50,55,65,67
2400001600002100001
2400001600002110001
(20-28),9,16
2400001600002110002
2400001600000680001
(3-13),2
2400001600002320001
2401200003800040001
04214831001
2401200003800030001
1,2,4,8,14
2401200003800060001
2401200003800070001
2401200003800080001
2401200006900060001
663035
04214849001
2401200006900030001
(1-3),(4-38)
2401200006900050001
2401200006900190001
2401200006900090001
(1-13),17
2401200006900160001
2401200006900150001
(2-14),(7-9)
2401200006900070001
2401200006900020001
2401200006900120001
2401200006900040001
3,8,(24-30)
2401200006900230001
2401200001600030001
04214849008
2401200001600050001
1-21,27
2401200001600040001
2401200001600020001
2401200001600090001
2401200001600060001
2401200005100020001
04214849006
(4-20),11
2401200002300010001
04214849003
1-42,46-48
2401200002300020001
1-12,15
2401200002300030001
2401200002300070001
2401200002300110001
10,34
2401200002300120001
2401200002300080001
2401200002300060001
(1-5),2,11,13,15,19
2401200000300030001
04214849002
2401200000300050001
2401200000300090001
2401200000300040001
2401200000300010001
2401200000300060001
2-6,8,17,17
2401200005900040001
04214849009
2401200005900020001
2401200005900010001
2401200005900030001
2401200003500060001
04214849005
2401200003500040001
2401200003500030001
2401200003500050001
1-15,19
2401200003500020001
2402200000800070001
662042
04226830001
2402200000800020001
2402200000800060001
(2-18),1,1,1
2402200000800050001
2402200000800080001
2402200000800100001
2402200000800030001
2402200000800010001
2402200000800040001
2402200000800090001
2402200000900030001
04226830002
2402200000900010001
2402200000900020001
(3-61),(10-50)
2402200001400010001
04226830003
2400002100000070001
04575000000
2400002100000020001
2400002100000030001
(1-7),(2-28)
2400002100000100001
2400002100000010001
2400002100000060001
2400002100000130001
2400002100000040001
2400002100000140001
2400002100000150001
2400900000800010001
04210804003
(5-91),(2-106)
2400900003400030001
04210804002
2400900003400020001
2400900003400010001
2400900003400040001
2,4,(12-96),(3-75)
2400900000300100001
663077
04210804001
2400900000300090001
2400900000300010001
2400900000300040001
2400900000300050001
2400900000300020001
2400900000300030001
2400900000300080001
(1-97),(2-46)
2400900000300070001
2401200007000290001
663011
04214804001
2401200007000260001
2401200007000270001
2401200007000020001
2401200007000010001
2401200007000030001
2401200007000040001
2401200007000340001
2401200007000140001
2401200007000280001
2401200007000220001
2401200007000050001
2401200007000060001
2401200007000070001
2401200007000180001
2401200007000150001
2401200007000080001
2401200007000170001
2401200007000090001
2401200007000240001
2401200007000190001
2401200007000110001
2401200007000200001
2401200007000250001
2401200007000320001
2401200007000380001
2401200000400020001
04214804004
2401200000400030001
2401200000400040001
2401200000400010001
2401200000400050001
2401200000400090001
2401200000400070001
2401200000400080001
2401200000400060001
2401200000400100001
2401200003700370001
04214804003
2401200003700110001
2401200003700510001
2401200003700530001
2401200003700550001
2401200003700320001
2401200003700330001
2401200003700560001
2401200003700160001
2401200003700650001
2401200003700390001
2401200003700660001
2401200003700280001
2401200003700350001
2401200003700220001
2401200003700240001
2401200003700590001
2401200003700600001
2401200003700620001
2401200003700290001
2401200003700630001
2401200003700640001
2401200001000120001
04214804002
2401200001000030001
2401200001000080001
2401200001000130001
2401200001000150001
2401200001000100001
2401200001000170001
2401200001000060001
2401200001000180001
2401200001000010001
2401200001000160001
1-152
2401200001000050001
2401200001000020001
2401200005500040001
660015
04214837001
2401200005500070001
2401200005500520001
2401200005500110001
2401200005500190001
2401200005500220001
2401200005500170001
4,(3-11)
2401200005500160001
1,(2-18),(11-17)
2401200005500140001
2401200005500010001
1-2,(5-9)
2401200005500180001
2401200005500050001
2401200005500030001
1-4,6,11
2401200005500290001
2401200005500100001
2401200005500080001
2401200005500130001
2401200005500060001
2401200005500260001
2401200005500370001
3,(10-14),(17-19)
2401200005500380001
24,48,48,54
2401200005500450001
(1-7),(6-8)
2401200005500690001
2401200005500090001
2401200005500720001
2401200002000010001
04214837002
2401200002000040001
2401200002000090001
2401200002000110001
2401200002000050001
2401200002000060001
2-4,6,9
2401200002000080001
1-15,18-20,(22-28)
2401200001700100001
663033
04214810001
2401200001700040001
2401200001700030001
2401200001700020001
2401200001700090001
2401200001700080001
2401200001700120001
2401200001700050001
2401200001700140001
2401200001700070001
2401200001700130001
2401200001700150001
2401200007800070001
663019
04214810002
2401200007800030001
2401200007800020001
2401200007800050001
(2-8),(7-15)
2401200007800010001
2401200007800060001
2401200007800040001
(1-71),(2-74)
2401200006000030001
663037
04214840001
2401200006000020001
2401200006000010001
2401200006000050001
1,5,7,11,(2-6)
2401200006000140001
2401200006000090001
2401200006000100001
2401200006000070001
2401200006000060001
2401200006000040001
2401200006000150001
2401200006000080001
2401200006000110001
2401200006000130001
2401200006000160001
2403600000100010001
04251822001
2403600000100020001
2403600000100030001
2403600000100040001
2403600000100050001
1-8,11-45
2403600000100060001
2403600000100070001
(3-33),(4-38)
2403600000100080001
2-4,7-88
2403600000100090001
2403600000100100001
2403600000100450001
1-88,92
2403600000100110001
1-22,(30-38),37,39
2403600000100120001
2403600000100130001
2403600000100140001
1,3-13,17
2403600000100150001
2403600000100160001
(3-127),(4-94)
2403600000100170001
2403600000100180001
2403600000100190001
1-12,16-24,27
2403600000100200001
(1-45),(4-40)
2403600000100210001
2403600000100220001
1-23,28,28,31-34,(48-56)
2403600000100230001
2403600000100240001
2403600000100250001
2403600000100260001
2403600000100270001
2403600000100280001
2403600000100290001
2403600000100300001
2403600000100310001
2403600000100320001
2403600000100330001
2403600000100340001
2,5-7,10,12,14
2403600000100350001
2,30,34,38
2403600000100360001
1-23,26,28,30
2403600000100370001
2403600000100380001
2403600000100390001
2403600000100400001
2403600000100410001
1-5,9,11,12,16,20
2403600000100420001
2403600000100430001
2403600000100440001
2403600002000010001
04251822002
1,2,5,7,9-20
2403600002000040001
1-3,7-10,14,16
2403600002000050001
2403600002000070001
1,3-7,9,12-17
2403600002000020001
1-8,13-22
2403600002000030001
2403600002000080001
2403600001300050001
04251822003
2403600001300010001
2-5,10
2403600001300060001
2403600001300030001
1-6,9-11
2403600001300020001
1-8,10-12,14
2403600001300040001
2403600001900100001
04251822004
2403600001900060001
2403600001900050001
2403600001900080001
2403600001900030001
2403600001900020001
2,3,6-14,16,18
2403600001900010001
(6-8),(1-17)
2403600001900040001
(1-53),(2-30)
2400900003800050001
663066
04210825001
2400900003800130001
2400900003800060001
2400900003800010001
2400900003800070001
2400900003800110001
2400900003800090001
2400900003800150001
2400900003800100001
2400900003800140001
(2-22),(3-5)
2400900003800020001
2400900003800170001
2400900003800180001
2400900003800030001
2400900003800080001
2400900003800040001
2400900002700010001
04210825002
2400900002700030001
2400900002700020001
2400900002700040001
2400900001400040001
04210825003
2400900001400020001
2400900001400010001
2400900001400030001
2400900000400020001
04210825004
2403600003400020001
663054
04251810002
2403600003400090001
2403600003400070001
2403600003400080001
2403600003400060001
2403600003400100001
2403600003400010001
2403600003400050001
2403600003400040001
2403600003400030001
(3-25),(2-18)
2403600000600030001
663044
04251810001
2403600000600110001
2403600000600010001
2403600000600100001
2403600000600180001
2403600000600070001
(1-9),(4-6)
2403600000600170001
2403600000600140001
2403600000600210001
2403600000600160001
2403600000600080001
2403600000600060001
(1-61),(2-16)
2403600000600120001
(1-13),(4-16)
2403600000600040001
2403600000600020001
2403600000600200001
2403600000600130001
2403600000600190001
2403600000600090001
2403600000600150001
2403600000600050001
6,9,11
2401200003600700001
27-42,46-48,50,59
2400001200003580001
1-9,11,13,14,16,18,19,20,22-26
2400001200003590001
1,6,9,11-13,21
2400001200000450001
1-15,31,34-37
2400001200003600001
1,3-15,19
2400001200003630001
1-11,13-15,28 ,28
2400001200003640001
1-5,7,8,10-14,16,19,20
2400001200003650001
2400001200000600001
1-20,24-27
2400001200004170001
2400001200000700001
4,19,21
2400001200000010001
2400001200004340001
2400001200000750001
2400001200000760001
38-43
2400001200004300001
2400001200000780001
2400001200000790001
2400001200004970001
2400001200000800001
2400001200000140001
2400001200004420001
2400001200004260001
2400001200004310001
2400001200000880001
2400001200000930001
2400001200000950001
2400001200004430001
1,3-5,8,11,14-17
2400001200004440001
2400001200000100001
2400001200000160001
37,39,41,43,45,47
2400001200001160001
2400001200004400001
2400001200003860001
2400001200001240001
2400001200000020001
2400001200000170001
2400001200000380001
2400001200001280001
2400001200004460001
2400001200000180001
2400001200000390001
2,4,6,10,(14-22),28-81
2400001200001290001
2400001200001320001
2400001200001350001
2400001200001370001
2400001200001390001
1-5,9-12,14-18,20,25
2400001200004470001
2400001200004490001
4-31
2400001200004500001
2400001200003920001
5,7,11,14
2400001200004520001
2400001200001530001
3,8,16
2400001200004530001
17,19-21,24,31
2400001200001570001
2400001200001580001
2400001200001690001
2400001200001640001
2400001200001650001
1-16,23
2400001200001630001
2400001200001680001
2400001200004650001
2400001200001720001
1-3,5,10-12,18
2400001200004240001
2-116
2400001200001820001
2400001200001890001
2400001200004540001
2-56
2400001200000240001
2400001200000420001
1-141
2400001200004550001
29-81
2400001200004140001
2400001200002030001
2400001200002050001
6,8,14,16,17,19,21
2400001200003750001
4,5,7-10,12,13,15,16,18,(19-29),30-50
2400001200003980001
6,9-12,14,22
2400001200004560001
2400001200004200001
2400001200004000001
(3-9),8,12-14
2400001200002210001
2400001200004150001
2400001200000250001
2400001200002300001
2400001200002350001
2400001200000260001
2400001200004770001
2400001200002370001
2400001200004570001
2400001200002430001
1,2,5,7
2400001200002440001
2,3,7,12,18
2400001200004060001
2400001200004590001
9,12-14
2400001200004600001
2400001200002590001
35,37,40,47,49
2400001200002600001
2400001200004780001
9,11,12,18,19,24,25,(30-36),35
2400001200002410001
1-3,5,11,17
2400001200004230001
2400001200002780001
2,3,4,6
2400001200004860001
2400001200004620001
60,61,(91-95),101
2400001200003760001
11-14,25
2400001200004950001
2400001200002860001
2400001200002850001
2400001200004870001
2400001200002980001
2400001200004880001
2400001200004660001
2400001200005020001
2400001200005030001
2400001200004890001
2400001200003180001
1,4,9
2400001200000300001
2-6,8,10,16,18
2400001200004250001
2400001200004130001
2400001200004900001
2400001200004220001
2400001200003290001
5,7,13,15
2400001200004410001
4,6,10,13,15
2400001200003360001
2400001200000080001
3,6,8,12
2400001200000320001
(2-10),(9-23)
2400001200004390001
3-43
2400001200004920001
2400001200004910001
2400001200003450001
2400001200004480001
2400001200000440001
1,3-6,10,12,13,18,21
2400001200004630001
2400001200000680001
2400001200001040001
2400001200001120001
2400001200001150001
2400001200001430001
2400001200004690001
5,6,9,11,12,14,19
2400001200004700001
1-59,61,63,67-84
2400001200001550001
1,84
2400001200001620001
2400001200001760001
2400001200002000001
1-4,6-8,10,15-40
2400001200002040001
2400001200002260001
2400001200002450001
6-81
2400001200002540001
2400001200004790001
(10-20),22-52
2400001200002610001
2400001200004110001
7,8,13-15,17,19,20
2400001200002690001
2400001200002700001
2400001200002660001
1,2,12,14
2400001200002740001
2400001200002840001
2400001200002880001
2400001200002960001
3,7,8,(14-16),19-22,24,26
2400001200004160001
1,3,8-11
2400001200003010001
21-106
2400001200004280001
2400001200004840001
3,4,6 ,7,8,(24-28),29
2400001200003170001
17-48
2400001200004380001
2400001200003230001
2400001200003270001
1,3,17
2400001200003370001
2400001200003420001
5,9,11,18
2400001200003540001
2400001200003570001
1-3,8-12
2400001200003710001
2400001200003720001
1-9,12
2400001200003730001
2,4,7,(10-14),(17-23)
2400001200000490001
(4-28),30-52
2400001200000500001
2400001200003700001
3,5,7,10,12-17
2400001200000620001
2-6,10,38
2400001200001000001
2400001200001030001
2-12,(21-29),(42-54)
2400001200001110001
12,14,(15-21)
2400001200001330001
2-7,9,10,(14-20),(24-28)
2400001200001410001
2400001200001590001
3-5,8-11
2400001200001800001
2,8,10,14,16
2400001200001830001
2400001200001840001
2400001200002060001
2400001200004730001
2400001200004930001
2400001200003060001
2400001200003080001
(1-9),(4-8)
2400001200003150001
(12-18),41,43
2400001200003400001
2400001200003430001
2400001200003560001
1-6,8,16,17
2400001200003770001
2,4 ,7,43
2400001200000690001
2400001200003830001
2400001200000890001
1,2,7,9-13,17-19,21
2400001200000900001
1,(6-10),11,13
2400001200000910001
1-5,9,17,21
2400001200001170001
1,2,5-7,9,11,12
2400001200001180001
2400001200005090001
2400001200004000002
2400001200002220001
2400001200003810001
2400001200002730001
2400001200002750001
4,5,8,10,11 
2400001200000060001
9,16,19
2400001200000280001
2400001200004190001
15,17,20,27 
2400001200004830001
(1-47),4 ,53
2400001200003100001
2400001200004580001
1,(5-9),13
2400001200003380001
2400001200004090001
(17-21),(24-28),25,27
2400001200001310001
6-10,13-27,36,38,41,43,49,51,55,57-71
2400001200001500003
(7-15),(12-22)
2400001200002190001
2400001200002330001
14,16,(24-48),(27-59)
2400001200002560001
2400001200004320001
10-18,(19-23)
2400001200002820001
2400001200002040002
1,3-26,28-41,44 ,46,48,(50-53),55-61
2400001200003670001
1-25,34,36,37,42
2400001200003610001
1-13,21-30,(44-48)
2400001200003660001
4-10,(13-19)
2400001200001050001
1-5,11,14,15,17
2400001200001260001
2400001200001730001
28 
2400001200004560002
2-4,6,7
2400001200000110001
2400001200005100001
(3-9),4,6,14
2400001200004750001
(7-19),23,12,14,18,20
2400001200004020001
3,4,9,10,12
2400001200000820001
2400001200000920001
1-7,9,13-18,20,22
2400001200000940001
2400001200001010001
2400001200001060001
2400001200001710001
1-4,(6-12),(16-22)
2400001200001780001
2400001200001790001
2400001200002140001
3-36
2400001200002110001
2400001200002460001
2400001200002480001
2400001200002650001
2400001200002950001
2400001200003110001
2400001200003160001
2400001200003200003
2-4,9,10,14,16,17
2400001200003330001
2400001200003470001
2400300011700020001
04203804003
2,3 ,7,16-18,22,24,38,46
2400300011700040001
3,5,(8-12)
2400300011700070001
2,10
2400300011700010001
1,2,4-8,15
2400300011300010001
04203819005
1,4-9,12
2400300011300020001
2400300011300030001
2400300011300040001
2400300011300060001
2400300011300070001
2,2 ,3-17,23-105
2400300011300080001
2400300008100020001
04203819008
2400300008100060001
2,18,20,22,25,27
2400300008100030001
1-8,10,12,13
2400300008100040001
2400300008100010001
2400300001400010001
04203804002
2400300001400170001
2400300001400220001
2400300001400190001
2400300001400140001
2400300001400070001
2400300001400130001
2400300001400090001
2400300001400100001
2400300001400120001
2400300007100010001
04203804001
2400300007100020001
2400300007100150001
2400300007100050001
2400300007100070001
2400300007100160001
2400300007100180001
2400300007100100001
(4-10),(1-11)
2400300007100120001
2400300007100130001
(2-12),(1-5)
2400300007100140001
4-10,12
2400300003400010001
662163
04203810003
2400300003400020001
1,2,4,6,7,9,10,19,20,22,26,29-32,34,36
2400300001500010001
662171
04203819002
41,42,44
2400300001500010002
2400300005600100001
04203819006
1-3,5-8,10-12,14
2400300005600050001
2400300005600040001
2400300005600110001
2400300005600010001
1-3,7-26,28-33,35,36,38-43,45,47
2400300005600030001
1-16,47
2400300005600020001
2-4,8
2400300005600090001
2400300005600070001
2400300007900010001
04203819007
2400300007900030001
2400300007900020001
1-7,9,10,12,14,15,16,18,20
2400300007300010001
04203819001
2400300007300190001
2400300007300030001
2-4,6,7-10
2400300007300040001
1,2,4-6,8,9
2400300007300050001
1-4,6,7,9,10
2400300007300060001
2400300007300070001
1,2,5,7,8,10,12,16
2400300007300080001
2-4,6,8-11,13-16
2400300007300110001
2400300007300120001
2400300007300130001
1,2,8,11
2400300007300180001
2400300007300150001
1,8-10,14
2400300007300160001
1,2,4-8,11,(15-19)
2400300007300170001
2400300003600030001
662173
04203807002
2400300003600010001
2400300003600020001
2400300003600040001
1-145
2400300003600050001
2400300003600060001
2400300003600080001
2400300003600070001
2400300003600090001
2400300004600010001
04203828005
2400300006200010001
04203807003
2400300001300070001
04203828003
2400300001300010001
2400300001300020001
2400300001300060001
2400300001300040001
2400300001300050001
2400300002100020001
04203807001
2400300002100030001
2400300002100050001
2400300002100060001
2400300002100070001
2400300002100100001
2400300002100080001
2400300002100090001
2400300004900030001
662174
04203810004
2400300004900010001
2400300004900040001
17-32
2400300004900060001
33-81
2400300004900020001
2400300003700210001
04203810001
2400300003700020001
2400300003700230001
2400300003700040001
2400300003700050001
2400300003700190001
2400300003700070001
2400300003700080001
2400300003700220001
2400300003700100001
2400300003700120001
2400300003700130001
2400300003700140001
2400300003700160001
2400300003700200001
2400300003700170001
2400300003700180001
2400300002300010001
04203810002
2400300001000030001
662175
04203828002
2400300001000020001
2400300001000010001
2400300004200010001
04203828004
2400300006000020001
04203828006
2400300006500010001
04203828007
2400300009600020001
04203828001
2400300009600030001
2400300009600040001
2400300009600130001
2400300009600080001
2400300009600090001
2400300009600120001
2,3,5,7,8,10,11,13,14,16,18
2400300011000010001
662176
04203822000
1,(5-15),19,21
2400300011000020001
1-27,34
2400300003900020001
04203822002
3-5,7,11,12,18,19,23-25,27-29,33,35,43
2400300003900010001
47,51,55,57,67,69,79-89
2400300003900010002
1-6,10
2400300012500010001
04203822005
2400300012000020001
04203822007
1,2,4-11,13-19,22-25,(27-31),32,38,40
2400300012000030001
2400300012000040001
2400300012000010001
2400300012000060001
2400300008200010001
04203822001
2400300008200020001
(2-20),(5-21)
2400300008200030001
2400300008200040001
2400300008200050001
2400300008200230001
2400300008200070001
2400300008200080001
2400300008200090001
2400300008200100001
2400300008200130001
2400300008200160001
2400300008200170001
2400300008200180001
2400300008200210001
1,2,5,6,9,13
2400300008200220001
8,13,16
2400300006100020001
04203822004
3,5,8,10,12,13,15,16
2400300006100030001
2400300008300010001
662177
04203813002
2400300004300060001
04203813001
2400300004300020001
2400300004300040001
2400300004300050001
34-64
2400300011600010001
662178
04203802002
2400300011600020001
65-67
2400300011600030001
2400300012200010001
04203802003
2400300012200020001
2400300012200050001
2400300012200040001
2400300012200030001
2400300001100100001
04203802001
2400300001100090001
2400300001100010001
2400300001100020001
2400300001100030001
2400300001100110001
2400300001100040001
2400300001100080001
2400300001100070001
2400300003200040001
662179
04203814002
2400300003200050001
37,40,52
2400300004700050001
04203814001
24,30,31,33,(34-38)
2400300004700070001
20-22,26-29,32
2400300004700060001
19,19 ,19¡
2400300004700080001
2400300004700110001
2400300004700030001
2400300004700100001
2400300004700120001
2400300004700090001
2400001200200010001
662172
04403554000
2400001200200300001
14,17
2400001200200290001
2400001200200370001
2,3,29-33
2400001200200040001
1,3,6,7,(10-22),19,26,28
2400001200200180001
2400001200200260001
2400001200200270001
2400001200200320001
2,4-57
2400001200200100001
2400001200200250001
2400001200200410001
2400001200200230001
2400001200200200001
2-128
2400001200200020001
2400001200200060001
2400001200200070001
2400001200200240001
1,3,4,7,9,17,19,21-23,25,27,28,38-62
2400001200200190001
2400001200200050001
4-37
2400001200200210001
2400001200200080001
2400001200200220001
7,9,11,14,16,18
2400001200200400001
2400001200200350001
2400001200200310001
2400001200200330001
2400001200200380001
2401000001700020001
662101
2409
04211825002
2401000001700010001
2401000001800130001
04211825003
2401000001900050001
04211807002
2401000001100020001
04211825001
10-57
2401000001100050001
2401000001100040001
2401000001100030001
2401000003300130001
662104
04211819003
2401000003300020001
5,7,10,12
2401000003300090001
2401000003300120001
1-8,11,15-17,19,21-23
2401000003300110001
1,1 ,13
2401000003300070001
2401000003300080001
2,9
2401000003300100001
4,5,7
2401000003600010001
662105
04211819004
2401000003600020001
1,3-5,7-24
2401000000500030001
04211819001
1-3,5,6,8,10-18,(20-54)
2401000000500090001
1,3,6,7,9-12,15,19-22,24-27,29-53
2401000000500050001
2401000000500020001
1,2,4-6,8-11,13,15-18,19,21-26,28,30-38
2401000000500040001
2401000000500070001
2-4,6-13,15-25,(27-33)
2401000000500080001
8,12-14,16,18
2401000000500060001
2401000001400030001
04211819002
2401000001400040001
2401000001300050001
662110
04211822002
2401000003500010001
04211807003
2401000003500020001
2401000000700020001
04211822001
2401000000700010001
3-60
2401000003000040001
04211822003
2401000003000010001
2401000003000020001
2401000003000030001
2401000003400010001
04211804002
2401000000900030001
04211807004
2401000000900040001
2401000000900020001
2401000000900010001
2401000003100010001
04211807005
2401000000300050001
04211804001
2401000000300040001
2-70
2401000000300020001
2401000000100330001
04211807001
2401000000100260001
2401000000100380001
2-17,19-29
2401000000100190001
1-29,31-65
2401000000100070001
2401000000100470001
2401000000100250001
2,3,5-13
2401000000100160001
2401000000100480001
3-44
2401000000100180001
2401000000100280001
2401000000100090001
2401000000100350001
2401000000100340001
2401000000100100001
2401000000100150001
2401000000100140001
2401000000100040001
1,3-25,27-41
2401000000100060001
3,5-46
2401000000100170001
2401000000100370001
2401000000100110001
2401000000100130001
4-13,15,16
2401000000100390001
2401000000100230001
2401000000100200001
2401000000100210001
1-13,15-28
2401000000100320001
2401000000100400001
5-95
2401000000100300001
2401000000100050001
2401000000100120001
1-10,12-14
2401000000100360001
4-42
2401000000100410001
3,5,13-15
2401000000100520001
5-107
2401000000100020001
2401000000100460001
2401000000100010001
2401000000100220001
2401000000100510001
2401000000100240001
2401000000100490001
2401000000100290001
2401000000100310001
2401000000100080001
2401000000100450001
2-58
2401000000100430001
2401000000100030001
2401000000100530001
2401000001500020001
662112
04211810002
2,6,10,12,13,15
2401000002000030001
04211810004
2401000002200020001
04211810003
2401000002200010001
3,6-8,20/2
2401000002900010001
04211810007
1-7,9,11,14,18,19,21-23,25
2401000000400020001
04211810001
1,1/1,5
2401000000400030001
2401000000400010001
2401000001200040001
662113
04211813002
4,5,8,9,11,(12-16)
2401000001200020001
2401000001200060001
1-8,10-15,17-31,33-39,41-58
2401000001200010001
1-5,7-9,(11-15)
2401000001200030001
2401000001200050001
1-13,15,17-21,22 ,23-40
2401000003200020001
04211813004
1-15,(16-22)
2401000003200010001
2401000000600080001
04211813001
1-28,(29-35)
2401000000600030001
(3-7),11
2401000000600090001
2401000000600060001
1-4,(5-15)
2401000000600050001
1-41,44-48,50
2401000000600020001
1-9,11-24,25 ,26,27,27á,28-33,(34-38)
2401000000600040001
2401000000600070001
1-49,50,50 ,50¡,50¤,51,51 ,52-84
2401000000600010001
2401000001600020001
662117
04211802004
1-4,6-76,78-87,89
2401000001600010001
1-6,8-16,18-27,29-37,42-49,(51-67)
2401000002300010001
04211802002
1-3,7,8,11,14-28,29-33,35-37,40,(46-50)
2401000002500010001
04211802003
1-12,14,16,17,19-33,35-41,43-48,50-52,54
2401000000200010001
04211802001
56-58,60-71,73-75,(77-93),100,102
2401000000200010002
2401000000200040001
2401000000200030001
2401000000200020001
2401000002100040001
662118
04211816004
2401000002100050001
2401000002100020001
2401000002100030001
2401000002100010001
2401000002800030001
04211816003
2401000002800010001
2401000002800060001
2401000002800080001
(1-15),(2-56)
2401000002800070001
2401000002800050001
2401000002800020001
2401000002800040001
2401000000800090001
04211816002
2401000000800070001
2401000000800100001
2401000000800060001
2401000000800010001
2401000000800040001
2401000000800080001
2401000000800050001
2401000000800030001
2401000001000080001
04211816001
2401000001000060001
2401000001000020001
2401000001000030001
2401000001000090001
2401000001000050001
2401000001000010001
2401000001000040001
2401000001000070001
2400600002600020001
662120
2405
04206819002
2400600002600030001
12-95
2400600002600010001
2400600004500020001
04206816002
2400600004500040001
2400600004500010001
2400600004500030001
2400600005200010001
04206816003
2400600000100270001
04206816001
2400600000100010001
2400600000100020001
2400600000100030001
2400600000100040001
2400600000100050001
2400600000100060001
2400600000100070001
2400600000100080001
2400600000100090001
2400600000100100001
2400600000100110001
2400600000100600001
2400600000100120001
2400600000100130001
2400600000100140001
2400600000100280001
2400600000100150001
2400600000100290001
2400600000100160001
2400600000100170001
2400600000100300001
2400600000100180001
2400600000100190001
2400600000100200001
2400600000100310001
2400600000100210001
2400600000100220001
2400600000100230001
2400600000100240001
2400600000100250001
2400600000100260001
2400600000100320001
7-13
2400600000100620001
2400600000100630001
2400600000100370001
2400600000100330001
2400600000100380001
2400600000100340001
2400600000100390001
2400600000100400001
2400600000100410001
2400600000100430001
2400600000100420001
2400600000100440001
2400600000100360001
2400600000100450001
2400600000100460001
2400600000100470001
2400600000100480001
2400600000100490001
2400600000100500001
2400600000100510001
2400600000100520001
2400600000100540001
2400600000100550001
2400600000100560001
2400600000100570001
2400600000100580001
2400600000100590001
2400600003900010001
662122
04206819003
6,8,(12-16),(1-5),11,(15-21)
2400600001200030001
04206819001
2400600001200040001
(4-10),(16-20),(26-58),(62-70),74,78
2400600001200020001
(1-21),27,(33-37),(41-47),53,57
2400600001200020002
(63-69),(73-79)
2400600001200020003
(4-22),(28-38),42,44,48,50,1,3,7,49
2400600001200010001
(11-21),(25-45)
2400600001200010002
2400600002900010001
04206826003
2400600004800010001
04206826002
1,3-5,9-11,13,15,21,22
2400600003000010001
662123
04206807005
12,17-20
2400600003000020001
2400600003500010001
04206807003
12,13,15,16 ,16¡,17¡,19,18¡,26 ,27¡,28 
2400600004200010001
04206807002
29,31¡,(32-36),37,38 ,39¡,40 ,41 ,41¡
2400600004200010002
2400600004200010003
1,3 ,5-9
2400600004600010001
04206807006
1 ,1¡,3 ,3¡,4 ,4¡,7 ,7¡,9 ,9¡,10 ,10¡,13
2400600000700010001
04206807001
1 ,2,17-19,20 ,20¡,21,21¡,22,23 ,26,27
2400600000700020001
28 ,28¡,29,24,25 ,30,32,33 ,33¡,36-38,40
2400600000700020002
41-43,45,47,48,50,53,54,56,59,60,60¡,62
2400600000700020003
63,64,66,68,69
2400600000700020004
2400600000200040001
662125
04206803001
2400600000200020001
1-9,(11-135)
2400600000200030001
4-158
2400600000200010001
2400600000200050001
2400600000200060001
2400600002300090001
662130
04206803002
2400600002300080001
2400600002300060001
2400600002300040001
2400600002300020001
2400600002300030001
14-61
2400600002300010001
2400600002500020001
04206803003
2400600002500030001
2400600002500040001
2400600005000010001
04206810002
2400600005100010001
04206810003
2400600005400010001
662131
04206825000
2400600002100020001
04206825002
2400600005300010001
2400600004300010001
04206825003
2400600004300030001
2400600004300020001
2400600004100090001
04206825001
2400600004100070001
2400600004100110001
2400600004100010001
2400600004100060001
2400600004100030001
2400600004100080001
2400600004100050001
2400600004100120001
2400600004100040001
2400600004100100001
2400600004100020001
4,6,11,12,15-21,23,25-29,(30-38)
2400600002000020001
662132
04206828004
5,9,11,15,17,40
2400600002200010001
04206828003
1,4-11,13,15-27,(30-40),(45-51)
2400600002200020001
1-3,6-9,10 ,12,39
2400600003300010001
04206828002
1,4-11,13,15-17,19,20
2400600003600020001
04206828005
5,6,8,10,(11-15),(16-20),23,24,28,31
2400600003600010001
32,37-39,44,(48-52)
2400600003600010002
3-6,8-11,13
2400600000900010001
04206828001
2,4-7
2400600000900030001
(3-11),12,14,15,19,22,25,30
2400600000900040001
2400600000900020001
2400600002700020001
662133
04206822002
2400600002700030001
2400600002700010001
2400600003800010001
04206822004
2400600004000030001
04206822003
2400600004000020001
2400600004000010001
2400600001400040001
04206822001
2400600001400050001
2400600001400030001
2400600001400020001
2400600001400010001
2400600003700010001
662134
04206810006
2400600003700020001
2400600004400010001
04206810004
2400600001100010001
04206810001
2400600001100060001
2400600001100020001
2400600001100050001
2400600001100030001
2400600001100040001
2400600001900010001
662135
04206826001
2400600001900020001
2400600001900030001
2400600001900040001
2400600001900120001
2400600001900130001
2400600001900060001
2400600001900070001
2400600001900080001
2400600001900090001
2400600001900100001
1,9,11,16,34,35,37,38,41
2400600001900110001
1,4,7,9-11,13,18,20,22,23,25
2400600002400010001
662136
04206554001
4,12,25
2400600002800020001
04206554002
1,3,4,8,9,11,12,15,16,18,20,21,27,33,34
2400600002800030001
47,53,55
2400600002800030002
1,9,18,19,31
2400600002800040001
1,8,9
2400600002800050001
3,6,10
2400600003200040001
04206554003
1,2,9,32
2400600003200050001
2400600003200010001
2400600003200020001
2400600001700010001
04206554000
2400600001700030001
2400600001700040001
2400600001700180001
2400600001700050001
3-49
2400600001700060001
2400600001700190001
2400600001700070001
2400600001700080001
2400600001700090001
2400600001700100001
2400600001700110001
2400600001700200001
2400600001700120001
2400600001700130001
2400600001700160001
2400600001700170001
2400600001700210001
(2-6),18,20,22,26
2400600001700140001
2400600001700150001
2400600001000010001
662138
04206808001
2400600001000020001
2400600001000070001
2400600001000030001
2400600001000080001
2400600001000040001
2400600001000050001
2400600001000060001
(1-13),(12-18)
2403301500001140001
1-10,11,11 ,12-35
2403301500001150001
1-53,60
2403301500001160001
1-19,20,20 ,21,21 ,22-35
2403301500001170001
1,2,2 ,3-8,27
2403301500001180001
2403301500001190001
1-2,3,3 ,5-16,17,17 ,18,19,19 ,20-30,31
2403301500001200001
31 ,32-69,70,70 ,71,72,72 ,73,74,74 ,74¡
2403301500001200002
75-87
2403301500001200003
1,1 ,1¡,2-7,11
2403301500001210001
2403301500001220001
1,1 ,1¡,1¢,2,2 ,3-9
2403301500001230001
(2-6),8,8 ,(10-14)
2403301500001240001
1,2,3,3 ,5,7-17,20,32,32 ,33,49,56
2403301500001250001
2403301500001260001
1,3,16,28
2403301500001270001
1,2,2 ,3,4,8,9,12-19,21,22,23,27
2403301500001280001
1-44,45,45 ,46,47,47 ,48,49,50,50 ,52-59
2403301500001290001
2403301500001290002
1-22,(25-29)
2403301500001300001
2403301500001310001
2403301500001320001
2,(3-9),10,21
2403301500000080001
2-8,10,12,14,31,33,35
2403301500001330001
2403301500001340001
1-11,13-14,(15-21)
2403301500001350001
2403301500001360001
1-20,21,21 ,22,22 ,23-26,27,27 ,(29-33)
2403301500001370001
1-3,(4-16)
2403301500001380001
1-15,16,16 ,17-31,32,33,33 ,33¡,33¢,35
2403301500001390001
35 ,35¡,37
2403301500001390002
2,4,5-27
2403301500001400001
2-8,10-13,17
2403301500001410001
2403301500001420001
1,2,4,9,26
2403301500001430001
1-11,12,12 ,13-19,29
2403301500001440001
2403301500001450001
1,3,5 ,5¡,5,6-8
2403301500001470001
2403301500001480001
1-7,8,8 ,9-10,11,11 ,12-18,19,19 ,20-143
2403301500001490001
1,1 ,2-11,12,12 ,12¡,14,14 ,16
2403301500001500001
(1-51),61,63
2400000100000900001
(2-54),(58-74)
2400000100000900002
(5-11),19,25
2400000100001240001
2400000100001240002
(1-17),23
2400000100001360001
(2-6),(10-20),(30-34)
2400000100001360002
1-27,31-35,43,47-53,57-65,69-79
2400000100001620001
660130
2-8,12-16,20-24,28-32,38,46-64
2400000100001620002
68,72-76,80
2400000100001620003
2400000100000020001
2400000100000020002
2400000100001840001
2400000100002080001
2400000100002580001
1,3,39
2400000100002580002
2400000100006910001
1,3,(13-19),(23-33)
2400000100006910002
2400000100003070001
2400000100003130001
(2-20),34,36
2400000100003130002
2400000100003480001
2400000100003480002
(1-13),(17-25)
2400000100003510001
2400000100003510002
2400000100003490001
16,26
2400000100003500001
(74-90),94,(98-106)
2400000100002460006
2,(6-36),(40-68)
2400000100003170001
(3-77)
2400000100003170002
2400000100000030001
(166-182),(190-216)
2400000100003240006
2400000100003750001
(2-44),48,(54-60),(64-68),72,74
2400000100003750002
2400000100003730001
(4-28),36
2400000100003730002
(2-16),(22-60)
2400000100003980002
(114-156),160,162,(172-186),190
2400000100004010004
2400000100004470001
2400000100004470002
(3-17),21,23
2400000100004530001
(2-16),18 
2400000100004530002
(1-27),(2-56)
2400000100004410001
2400000100001570001
(2-4),(1-5),12
2400000100002300001
2400000100004910001
(1-13),(8-16),4
2400000100000010001
2400000100001580001
2400000100002310001
(3-17),4
2400000100005460001
2400000100001590001
1,8,14
2400000100000080001
2400000100000190001
2400000100000390001
(19-25),(12-14),33,35,20
2400000100001190001
(11-13),17,35,37,41,43,51
2400000100001480001
(26-36),10,10,20,22,40,44
2400000100001480002
(10-18),(31-39)
2400000100001820001
(7-11),3,15,(10-16),6
2400000100002120001
(1-5),2,4,12
2400000100002290001
2400000100002430001
(3-7),(13-21),18,20
2400000100002590001
(1-17),(8-12),(18-40),2
2400000100002900001
(1-9),17
2400000100003160001
1,4,5
2400000100003850001
41,30
2400000100005070001
(23-43),(50-56),18,26,28,38
2400000100005140001
2400000100005190001
(1-3),20
2400000100005210001
(3-31),(20-26),6,14,30,32
2400000100005270001
2400000100009520001
(1-5),12,20
2400000100006140001
(5-9),1,19,(14-20),4,8,10,28,32
2400000100006160001
(1-5),(13-21),9
2400000100006170001
(2-4),(20-22),(30-34),26
2400000100006320001
1,7,19,23,25,29,37
2400000100006320002
9,12
2400000100001280001
2400000100006350001
8,9,9,9,15
2400000100006550001
(5-13),17,18,24,26,31,33
2400000100006920001
(1-23),(27-69),(8-34),(38-48)
2400000100007000001
2400000100007000002
(43-47),(2-6)
2400000100007300001
(4-14),(5-9)
2400000100007630001
(5-11),(10-14),1,4,6
2400000100007650001
(4-18),3,11,17,19,22,23,24,32,34
2400000100008020001
2400000100008260001
2400000100008310001
8,12,13,14
2400000100008330001
1,1,20,22,25,27,46,57,59
2400000100008460001
2404400000200020001
648594
2470
04146902001
1-16,18-19
2404400000200100001
1-15,17,19,21
2404400000200090001
2404400000200060001
1-3,5,7,9-11
2404400000200040001
2404400000200070001
2404400000200010001
1-3,5-12,14,16,18
2404400000200050001
2404400000200030001
1-6,10,12
2404400000200080001
1-7,9-10,12-17
2404400002300010001
648483
04149904001
1-11,13,15-22
2404400002300030001
1,(2-12),13-18
2404400002300020001
2404400002300040001
2404400002600010001
648481
04149907001
2404400002600020001
2404400001500020001
648368
04143913001
2404400001500050001
2404400001500030001
1,3-9
2404400001500010001
2404400001500060001
1,3-6,(8-12)
2404400001500080001
2404400001500070001
2404400001500040001
2404400001100030001
648367
04143903001
2404400001100020001
2404400001100010001
2404400001100040001
2404400001100050001
2404400001600020001
648372
04143915001
2404400001600040001
5-25
2404400001600030001
2404400001600010001
2404400001400040001
648371
04143910001
2404400001400030001
2404400001400060001
2404400001400010001
2404400001400070001
2404400001400020001
2404400001400080001
2404400001400090001
4-19
2404400001400050001
2404400001300010001
648364
04143907001
2404400001300030001
2404400001300020001
2404400001800020001
648365
04143905001
2404400001800010001
2404400001200020001
648373
04143904001
2404400001200010001
2404400001200030001
2404400001700020001
648369
04143913002
2404400001700010001
2404400001700030001
2404400002400010001
648484
04149906001
2404400002400020001
2404400002500040001
648482
04149910001
2404400002500060001
2404400002500010001
2404400002500050001
2404400002500020001
2404400002500030001
2404400000500030001
648581
04146913001
2404400000500020001
2404400000500010001
2404400000800030001
648592
04146922001
2404400000800020001
2404400000800010001
2404400000800040001
2404400000800050001
2404400000900010001
648591
04146924001
2404400000900030001
2404400000900050001
2404400000900040001
2404400000900060001
2404400000900020001
2404400000900070001
2404400000700040001
648593
04146919001
2404400000700030001
2404400000700010001
2404400000600010001
648580
04146916001
2404400000600020001
2404400000400010001
648571
04146907001
2404400000400050001
2404400000400020001
2404400000400040001
2404400000400030001
2404400000300100001
648590
04146904001
2404400000300060001
2404400000300040001
2404400000300090001
2404400000300070001
2404400000300050001
2404400000300020001
2404400000300010001
2404400000300080001
43-52,53 ,53¡,54-56,58,60,64,64 ,64¡,64¢
2404400001000010001
648360
04143902001
2404400001000020001
1,3-12
2404400001000030001
2404400001000040001
1,3-18,20-22,24,28,28 ,30,32-33,35-36
2404400001000050001
1-2,4,6-10,12-14,16
2404400001000060001
1,3-11
2404400001000070001
3,5,7-9,11-13,15-19
2404400001000080004
1-7,9,11,13-14
2404400001000090001
2404400001000390001
2-4,6,8,8 ,10-11,13,16,18,26,26 ,26¡,28
2404400001000100001
1-10,12,14,20,22,24,26,28
2404400001000110001
1,3-12,14-30,32,32 ,35
2404400001000120001
2404400001000130001
1-2,4-17,18 ,18¡,18¢,19-22,24,26 
2404400001000140001
1,2 ,3-8,10-22,23-26,28,30-31,33
2404400001000150001
1 ,2,3-18,(20-30)
2404400001000160009
1-2,4-5,7-19,21,21 ,23-25,27,39,41
2404400001000170001
1-12,21,23
2404400001000180001
2404400001000380001
1-4,6-10,13-32,34
2404400001000190001
2404400001000200001
1-2,4,6-7,9
2404400001000210001
1-16,18,18 ,20,30
2404400001000220001
4-5,8,11
2404400001000230001
1-6,8-9,11
2404400001000240001
2404400001000250001
1,4,6-7,9
2404400001000260001
1-2,4-8,10
2404400001000270001
2404400001000400001
2404400001000280001
2404400001000290001
2404400001000300001
9-10,12-34,36-42
2404400001000310002
2,3 ,4-6,8-11,15,17,19-21,23-40,(42-48)
2404400001000320001
2404400001000330001
1-13,15-28,29 ,30-35,(37-45),53
2404400001000340001
2404400001000350001
1-5,7-14,16-17
2404400001000360001
1-13,15,28,33,33 ,35,37-39,41-42
2404400001000370001
2404400002200010001
648490
04149902001
2404400002200030001
2404400002200040001
2404400002200050001
2404400002200060001
2404400002200070001
2404400002200080001
2404400002200090001
2404400002200100001
2404400002200110001
2404400002200120001
2404400002200020001
2404400002200130001
2404400002200140001
2404400002200150001
2404400002200160001
2404400002200170001
2404400002200180001
2404400002200190001
2404400002200200001
2404400002200210001
2404400002200220001
2404400002200230001
2404400002200240001
2404400002200250001
2404400002200260001
2404400002200270001
2404400002200280001
1-5,60-66
2404400002200290001
2404400002200300001
2404400002200310001
2404400002200320001
1-113,132 
2404400002200330001
2404400002200340001
2404400002200350001
2404400002200360001
2404400002200370001
2404400002200390001
66,68,70-71,74¢
2404400001000010002
38-40,43-45,47,49,51,51 ,53,55
2404400001000050002
2404400001000100002
(45-59),61
2404400001000170002
(44-54),58 
2404400001000370002
2400000500000620001
2400000500000000001
2400000500000000002
2400000500000630001
2400000500000630002
2400000500000240001
1-27,29-34,36-73
2400000500000390001
2400000500000250001
2400000500000010001
2400000500000910001
1,6,8,13,14,19,20-21,23,23,36,45-47
2400000500000540001
49,49
2400000500000540002
1-40,43-50
2400000500000400001
2400000500000020001
1-4,12,14-18
2400000500000260001
2400000500000030001
1/7
2400000500000900001
2400000500000040001
2400000500000270001
24,35-36,41
2400000500000760001
2400000500000570001
3,5,2,8,9
2400000500000750001
2400000500000050001
2400000500000770001
6,9
2400000500000790001
6,16,18,12,20
2400000500000660001
2400000500000060001
2400000500000670001
9,15,36,38
2400000500000700001
1-96,106
2400000500000070001
2400000500000280001
2400000500000080001
2400000500000090001
2400000500000690001
2400000500000100001
2400000500000410001
2400000500000190001
2400000500000320001
2400000500000290001
2400000500000600001
2400000500000140001
2400000500000680001
4,6-9,13
2400000500000470001
5,11,25,29,31,39,43
2400000500000530001
2400000500000110001
2400000500000120001
2400000500000300001
2400000500000220001
2400000500000420001
2400000500000310001
2400000500000430001
5,7-10,13,16,22,26
2400000500000780001
2400000500000440001
2400000500000230001
2400000500000160001
2400000500000330001
2400000500000450001
1,3,5,7,9,11
2400000500000460001
2400000500000170001
2400000500000800001
3,5,14,18
2400000500000710001
3,6-9,11-12,13,21-22,35,77
2400000500000340001
2,4,6,10,12,14,15,18,23,34,36
2400000500000720001
1-2,4,7-10,12
2400000500000580001
4,7,8,15,16,18,23
2400000500000730001
2400000500000180001
2400000500000350001
2400000500000610001
2400000500000370001
2400000500000500001
6,11,15,19,23
2400000500000650001
2400000500000200001
2400000500000510001
2400000500000210001
1-5,27-35
2400000500000560001
3,5-6,33
2400000500000740001
1,6-10,23-44
2400000500000380001
2402900000100260001
2402900000100470001
2402900000100150001
(1-11),(15-29),31,33
2402900000100150002
(2-12),(1-7),11
2402900000100480001
(2-10),(14-46),(1-15),(25-47)
2402900000100460001
2,4,(8-54),(1-21),(25-51)
2402900000100180001
(2-6),10,(16-32),(1-5),(9-21)
2402900000100270001
(2-20),(26-44),(1-41)
2402900000100240001
(2-4),(1-17),21,23
2402900000100080001
(2-24),(28-34)
2402900000100210001
(1-7),11,(15-23),27,29
2402900000100210002
(2-12),(16-26),(1-9),(13-21),25,27
2402900000100450001
(4-12),(1-13)
2402900000100050001
2402900000100510001
(2-14),(1-5),(9-25)
2402900000100590001
10,(20-30),34,(38-48),52,(60-70)
2402900000100360001
76,80,82
2402900000100360002
(1-11),15,21,(25-37),41,(45-53),61
2402900000100360003
(65-69),(73-81),(85-91)
2402900000100360004
2402900000100330001
2402900000100500001
(2-14),18,20,(1-9),(13-21)
2402900000100600001
2402900000100540001
(2-10),14,(1-21)
2402900000100610001
(4-6),(1-7)
2402900000100650001
(6-12),(1-13)
2402900000100640001
2,(8-18),(1-15),(19-27),31,33
2402900000100130001
(37-43),(47-55)
2402900000100130002
2402900000100320001
(2-6),(14-18),(1-3)
2402900000100350001
2,4,(8-28),(1-9),17,23
2402900000100340001
2402900000100220001
(2-12),(16-26),(30-34),(40-46)
2402900000100420001
(52-54),58
2402900000100420002
(1-11),17,(23-27),31,33
2402900000100420003
(4-8),(12-14),1,(5-17)
2402900000100730001
663853
(22-32),(40-44)
2402900000100620001
3,5,(13-17),(21-27),31,(35-49)
2402900000100620002
6,(12-20),(24-32),36,42,44,(48-62)
2402900000100680001
1,13,15,19,(23-33),37
2402900000100680002
2402900000100740001
(4-10),(14-26),(1-5),(9-13),17,19
2402900000100710001
(4-10),1,(9-11)
2402900000100700001
4,(1-3),7
2402900006300040001
04239551003
(2-8),14,(20-26),(30-46),66
2402900003500030001
04239551001
3,11,19,21,27,(31-37),(43-45)
2402900003500030002
51,55,(79-81)
2402900003500030003
(68-86),75,85,87,(93-107)
2402900003500020001
(50-62),(57-59),63,(67-73)
2402900003500010001
2402900000700020001
04239804001
(2-118),(122-204)
2402900000700010001
(1-87),(91-149),(161-189)
2402900000700010002
2402900000700030001
2402900000700050001
2402900000700040001
2402900002500020001
04239804003
2402900005400040001
04239551002
(2-4),10,(14-18),(22-36),(40-50)
2402900005400020001
(54-60),64,66,70,(74-86),90
2402900005400020002
1,3,(7-11),15,(19-55),59,63,65
2402900005400020003
(69-77),81,83,(87-97),(101-109)
2402900005400020004
(113-127),137,(141-145)
2402900005400020005
(2-8),1,(5-9)
2402900006300020001
(2-6),(10-14),(1-3),7,11,15
2402900006300010001
(8-12),(16-20),(1-9),13,17,19
2402900002100030001
663824
04239813001
2402900002100060001
2,(8-20),1,(5-11)
2402900002100050001
(2-6),(10-22),(26-34),38,40,44
2402900002100010001
(1-15),21,25,27,31,43
2402900002100010002
2,4,8,(12-16),(3-17)
2402900002100040001
(4-14),(1-9),(13-19)
2402900004200010001
663835
04239840002
5,(9-23)
2402900004200020001
4,(10-12),18
2402900004200030001
1,3,9,(13-19),23,25
2402900004200030002
(2-12),(16-24),(7-11),21
2402900004200040001
(2-6),(1-9),(13-17)
2402900004200050001
(2-8),18,22,24
2402900004200060001
5,(11-13),19
2402900004200060002
(2-20),(26-30),(1-9),(15-17),21,27
2402900004200070001
(2-24),28,(1-9),(13-25)
2402900004200080001
(2-16),20,22,(26-40)
2402900004200090001
3,5,(9-25)
2402900004200090002
(2-4),8,12,14,(1-7),11,13
2402900004200100001
(2-20),26,(1-9),(17-23),(29-37)
2402900004200110001
2402900003600030001
663822
04239822001
2402900003600050001
2402900003600020001
2402900003600040001
2402900006400030001
04239822002
2402900006400020001
2402900006400040001
2402900006400010001
2402900005100010001
04239822003
2402900006500010001
663847
04239557001
2401600001000030001
663814
04218810001
(2-80),(1-79)
2401600001000020001
2401600001000040001
2401600000600010001
663806
04218807001
2401600000600020001
2401600000600040001
2401600000600030001
2401600000600050001
(2-4),(1-3),(9-11),15,19,25,27
2401600000600060001
(10-20),24,26,(32-58),62,64,70
2401600000600070001
(74-82),(86-94)
2401600000600070002
1,5,(13-19),(25-31),57,61,63,69,71
2401600000600070003
2401600000600070004
2401600000600080001
2,(8-16),20,22,26,32,(38-50),(54-68)
2401600004100010001
04218807003
72,(76-84)
2401600004100010002
(5-71)
2401600004100010003
2401600000500020001
663818
04218804001
2401600000500010001
2401600000500040001
(4-6),9
2401600005700070001
663810
04218804004
2401600005700040001
2401600005700030001
2401600005700020001
2401600005700050001
2401600005700010001
2401600005700060001
2401600000400080001
663815
04218802001
2401600000400060001
2401600000400070001
(2-8),(1-29),(33-37)
2401600000400030001
(2-24),(3-19)
2401600000400020001
(2-24),1,(5-37)
2401600000400010001
2401600000400050001
(2-34),1,3,(7-19)
2401600000400040001
2401600003800010001
04218802002
2401600003800040001
2401600003800020001
2401600003800030001
2401600005800010001
04218802003
(2-38),(1-29),33
2401600003600010001
04218802004
(2-18),(22-62),(1-51)
2401600002300030001
663816
04218822001
2401600002300050001
2401600002300010001
2401600002300040001
2401600004400030001
04218822004
2401600004400010001
2401600003400010001
04218822003
(2-46),(3-35)
2401600003300010001
04218822002
(2-6),(10-24),(5-7),25
2401600004700020001
663804
04218819002
2,4,8,10,(14-32),(3-13)
2401600004700030001
2401600004700010001
(6-12),(1-3)
2401600004000020001
04218819003
(2-8),16,(20-24),(28-36)
2401600004000010001
1,3,7,11,13,(17-21),(25-31)
2401600004000010002
2401600004800010001
04218819001
2401600004800060001
(4-8),(14-20)
2401600004800020001
2401600004800030001
(2-104),(1-77),(83-101),105
2401600004800040001
(2-20),(1-5),11,13
2401600004800050001
2401600004500070001
663803
04218813001
2401600004500010001
2401600004500020001
2401600004500040001
(2-50),(1-43)
2401600004500030001
2401600004500050001
(2-60),(1-47)
2401600005500020001
04218813004
2401600005500030001
2401600003900010001
04218813002
(2-48),(1-55)
2401600004600010001
04218813003
2401600001700020001
663813
04218816001
(2-32),(1-29)
2401600001700030001
(2-30),(34-36),(1-35)
2401600001700010001
2401600001700040001
2401600001700050001
2401600001700060001
2401600001700120001
2401600001700070001
2401600001700080001
2401600001700090001
2401600001700100001
2401600001700110001
2401600001700130001
2401600001700140001
(2-20),(1-9)
2401600003000010001
04218816004
2401600002000010001
04218816003
(2-6),(1-21)
2401600002000020001
2401600002000080001
2401600002000070001
2401600002000060001
2401600002000040001
2401600002000050001
2401600002000090001
(2-20),(26-40),44,50,54,56,60,62,70
2401600100000320001
663800
04218501000
(76-174),(3-19),27,(31-47),(61-97)
2401600100000320002
(101-121)
2401600100000320003
(2-54),1,(7-47),51,55,57,63,65
2401600100000380001
(2-14),20,(26-32),(1-9),(15-29)
2401600100000620001
2401600100000930001
2401600100000830001
2401600100000020001
2401600100000030001
(12-36),(21-47)
2401600100000220001
(2-6),10,12,(20-30),(7-19)
2401600100000460001
(2-8),(12-38),(1-19),23,(27-35)
2401600100000910001
(26-32),36,(29-33),37,39,43
2401600100000610001
(18-20),(24-26),(17-37)
2401600100000100001
(2-82),86,(90-106),(110-120)
2401600100000300001
(1-39),(43-97),(101-113)
2401600100000300002
2401600100000360001
(2-24),(30-100),(104-124)
2401600100000660001
(1-21),(27-41),(45-123)
2401600100000660002
2401600100000340001
(2-28),(32-42),(46-68)
2401600100000880001
(1-43),(47-63)
2401600100000880002
(288-370),(249-285)
2401600100000870001
(180-288),(179-297)
2401600100000920001
2401600100000510001
(124-256),(103-229)
2401600100000750001
(118-208),(115-227)
2401600100000670001
(102-188),(105-185)
2401600100000800001
(2-4),12,(1-7)
2401600100000700001
2,(6-22),(1-11)
2401600100000050001
(22-26),(37-45)
2401600100000970001
2401600100000990001
2401600100001020001
2401600100000890001
2401600100000180001
(2-24),36,38,(1-23),31,35
2401600100000780001
2401600100000220002
(2-32),(7-57)
2401600100000110001
(4-14),(1-15)
2401600100000610002
2401600100000350001
(2-6),1,3,7,5,13
2401600100001010001
663801
(2-6),10,(3-15)
2401600100000130001
(2-8),5
2401600100000770001
4,(8-16),20,22,(32-76),(7-43)
2401600100000150001
(2-8),(1-25),(33-41)
2401600100000850001
(2-20),24,28,30,(1-13)
2401600100000980001
(16-22),(19-25)
2401600100000610003
(10-12),(16-18),22,(28-32)
2401600100000400001
1,(7-13),17,23,25
2401600100000400002
(4-8),16,24,(30-40)
2401600100000500001
1,(5-13),17,25,(33-45)
2401600100000500002
2401600100001040001
2401600100000940001
2401600100000290001
2401600100000250001
2401600100000240001
2401600100000160001
2401600100000440001
2401600100000210001
(10-14),(18-24),(28-30),38,(46-48)
2401600100000870002
(70-72),(82-86),90,(98-284)
2401600100000870003
(372-432),7,9,17,(23-37),(43-51)
2401600100000870004
(61-79),87,91,(97-113),(121-247)
2401600100000870005
(287-377)
2401600100000870006
6,8,(12-88)
2401600100000920002
(1-5),11,13,(21-27),31,(35-93)
2401600100000920003
(1-25),33
2401600100000690001
2401600100000710001
(20-50),(7-33)
2401600100000020002
(2-98),1,(5-83)
2401600100000580001
(2-86),(3-73)
2401600100000390001
(2-86),(1-81)
2401600100000280001
(14-18),40,44,(48-52)
2401600100000460002
(1-5),21,(29-81)
2401600100000460003
(4-28),(1-3)
2401600100000470001
(38-46),(51-55),61
2401600100000220003
(8-14),32,(7-15),(39-41)
2401600100000100002
(38-40),(49-51)
2401600100000610004
2401600100000340002
(14-16),20,24,(36-42)
2401600100000030002
(17-21),(25-33),(37-39),43,47,49
2401600100000030003
2401600100000900001
(126-128),(125-127)
2401600100000660003
(122-134),(117-125)
2401600100000300003
(176-198),(123-151)
2401600100000320004
2,8,(16-72),(1-7),(13-77)
2401600100000230001
2401600100000630001
(2-66),(1-69)
2401600100000600001
2401600100000840001
2401600100000260001
(2-16),(1-7),15
2401600100000560001
(2-72),(1-75)
2401600100000790001
(6-82),(7-65)
2401600100000530001
(58-74),(86-174),(71-165),169
2401600100000380002
4,(8-22),28,(1-13),19,23,27,29,33
2401600100001030001
1,(11-21)
2401600100000010001
2,(6-8),12,14,20,(1-15),21,23
2401600100000680001
10,(5-9),13
2401600100000740001
(2-8),3,(9-19)
2401600100000310001
(2-6),(12-16),(9-13)
2401600100000370001
(2-4),(3-19)
2401600100000760001
2,(6-24),28,(32-46),(1-9)
2401600100000490001
2401600100000480001
2401600100000520001
(2-6),14,18,(1-7)
2401600100000720001
2401600100000090001
2401600100000570001
2401600100000550001
(8-10),(24-30)
2401600100000410001
(1-39),(43-49),(93-97)
2401600100000410002
2,(16-24)
2401600100000730001
9,(13-33),51,(55-59),(71-91)
2401600100000730002
(2-22),(30-34),(38-42),(46-54)
2401600100000080001
(1-49),55
2401600100000080002
2401600100000810001
(2-4),(1-19)
2401600100000200001
(2-12),(16-18),(1-5),9,(13-19)
2401600100000170001
(2-22),(1-17),21
2401600100000820001
(2-4),8,(1-13)
2401600100000450001
2401600100000040001
1,(7-37),(41-69),(73-81),(85-123)
2401600100000650001
(2-6),(10-24),30,32,(36-40),44,46
2401600100000140001
(50-64),(68-74),(78-90),(96-104),108
2401600100000140002
(114-116),(120-122),(126-128)
2401600100000140003
1,5,7,11,13,17,19,25,29,31,37,39
2401600100000140004
(43-81),(85-123)
2401600100000140005
4,6,(10-32),(38-52),(58-74),(78-116)
2401600100000060001
(1-7),33,(37-101),(109-117)
2401600100000060002
(2-34),(38-46),(50-54)
2401600100000590001
(1-41),(47-89)
2401600100000590002
2401600100000270001
(2-66),(72-84),(1-93)
2401600100000540001
(2-90),(1-97),(101-109),(113-125)
2401600100000120001
(2-76),(80-114),118,122,124
2401600100000650002
2,(14-22),(1-11)
2402900002000180001
663845
04239810001
2,8,18,(22-24),30
2402900006500070001
7,(17-23)
2402900006500070002
2402900006500060001
2402900006500040001
7,13,35,(8-12),36,46
2402900006500050001
(4-6),(10-12),(18-24),(1-3),(9-19)
2402900005900050001
663836
04239840001
2402900005900150001
(2-76),1,(5-11),(17-63)
2402900005900060001
(2-6),12,16,(20-26),30
2402900005900100001
(1-21),27,29,35
2402900005900100002
(2-30),34,(1-15),(21-31)
2402900005900170001
2402900005900020001
(2-12),16,18,(22-30),34
2402900005900030001
(1-9),(13-31),35
2402900005900030002
2402900005900120001
2402900005900180001
18,28,(13-21)
2402900005900070001
2,10,12,(22-28),32,44,48,(52-56)
2402900005900160001
(68-72),84,86,(90-94),98,106,112
2402900005900160002
(122-134),(142-150)
2402900005900160003
(21-27),39,41,47,53,57,59,71,73,81,83
2402900005900160004
89,91,97,99,(103-109),113,(129-139)
2402900005900160005
(143-149)
2402900005900160006
12,(11-15)
2402900005900130001
2402900005900040001
(2-24),(1-17),(21-37),41,(45-49)
2402900005900110001
2,(1-37),(41-45)
2402900005900010001
2402900005900140001
2402900005900090001
2402900005900080001
2402900002700040001
663833
04239816001
2402900002700050001
(2-4),8,12,(3-5),9,13
2402900002700070001
(2-12),16,18,24,26,30,32,(5-9),31
2402900002700010001
(2-4),8,10,(1-5)
2402900002700020001
(2-4),(12-36),40,42,50,52,(58-70)
2402900002700030001
(74-80),3,9,11,25,29,(33-41),45,51,55
2402900002700030002
(59-63),69,(73-85)
2402900002700030003
(2-14),(18-22)
2402900000200020001
663834
04239802001
2402900000200020002
(2-10),(1-5),(9-19)
2402900000200040001
2,6,8,(14-18),(22-28),(32-38)
2402900000200010001
(44-56),(60-82)
2402900000200010002
(1-47),(51-63),69
2402900000200010003
(2-4),(10-12),(16-24),(30-34),40,42
2402900000300010001
04239802002
2402900000300010002
2402900000300020001
(2-8),12,(1-5),(11-15)
2402900001700040001
663827
04239807001
2402900001700010001
(2-14),(1-3),7
2402900001700020001
2,4,(12-36),(40-42),(46-54),(60-64)
2402900001700030001
(1-11),(15-19),(25-31),(35-41)
2402900001700030002
(47-61),(65-69)
2402900001700030003
2402900003000020001
04239807002
2402900003000010001
(2-12),(20-24),(30-36),40,(44-50),54
2402900003000030001
(2-12),(16-18),22,24,28,34
2402900001100020001
04239807003
(3-7),11,(15-19),(23-35),41,45,49
2402900001100020002
(2-4),(8-12),(18-30),(34-44),48
2402900005200020001
04239807004
(1-7),13,17,25,27,33,35
2402900005200020002
(2-8),1,7
2402900002200010001
663860
04239557003
2402900002200110001
2402900002200030001
10,18,22,30,21,29,(33-39),(41-45)
2402900002200080001
2,(10-14),18,(1-5),11
2402900002200090001
2402900002200100001
2402900004300010001
04239557000
2402900004300070001
2402900004300130001
2402900004300110001
2402900004300120001
2402900004300100001
4,3,(11-13)
2402900004300030001
4,8,12,5,(11-13)
2402900004300040001
(4-6),(12-18),(1-7),11,19
2402900004300150001
4,10,12,16,1,(7-17)
2402900004300060001
(2-8),(14-22),1,(11-13),17
2402900004300140001
(2-4),10,14,18,22,24
2402900004300020001
(5-7),11,17,23
2402900004300020002
(2-4),(10-12),(1-3),7
2402900004300080001
2402900005300100001
663821
04239831001
2402900005300020001
2402900005300030001
(2-36),(1-41)
2402900005300040001
2402900005300050001
(2-148),(1-151)
2402900005300070001
2402900005300090001
2402900003100010001
04239831002
2402900003100020001
(2-26),(1-11),15,17,(21-25)
2402900004400010001
04239831004
(2-18),(1-15),(19-33)
2402900004400020001
2402900006100010001
04239831005
2402900006100020001
(2-20),(24-38),(3-37)
2402900006100030001
2402900002000010001
2402900002000020001
2402900002000030001
2402900002000040001
2402900002000050001
(2-10),(1-5),(9-17)
2402900002000060001
(2-8),(3-13)
2402900002000070001
36,(1-37)
2402900002000090001
2402900002000100001
2402900002000220001
2402900002000210001
2402900002000110001
2402900002000130001
2402900002000230001
(6-18),(7-21),(25-35)
2402900002000140001
2402900002000190001
(2-10),14,(1-21),(25-29)
2402900002000160001
2402900002000170001
2402900002000180002
(4-10),20,(1-5),9,17,19
2402900005700010001
663862
04239837001
(2-10),20,(1-7),(13-15),(19-21)
2402900005700020001
12,14,(1-7)
2402900005700050001
(10-14),(1-3),7
2402900005700070001
2402900005700080001
4,8,(5-7)
2402900005700090001
8,(1-5),(11-13)
2402900005700110001
22,28,5
2402900005700130001
2402900005700140001
6,(9-11),15,17
2402900005700150001
(2-10),(3-23)
2402900005700160001
(8-10),1,5,13
2402900005700170001
(1-9),8
2402900005700180001
2402900005700190001
(2-18),(1-9),13,23,25
2402900005700200001
(2-10),18,(3-5),11,(15-19)
2402900005700210001
(1-5),2,8,10
2402900005700230001
2402900005700240001
3,7,9,12
2402900001000040001
04239837002
7,9,13,15
2402900001000010001
2402900001000080001
(10-12),(7-9),25
2402900001000070001
(8-10),1,11
2402900001000050001
(10-14),1,7,15
2402900001000030001
10,9,(15-17)
2402900001000060001
2402900005500070001
663823
04239834001
2,(3-5),(9-23)
2402900005500010001
2402900005500040001
(2-6),(10-14),(18-26)
2402900005500050001
(1-13),17,(23-29)
2402900005500050002
(2-32),(36-48),52,54
2402900005500020001
(1-13),17,(21-37),(41-51)
2402900005500020002
2402900005500030001
2402900000900010001
04239834003
2402900003800020001
04239834006
(4-64),(13-69)
2402900004000010001
663825
04239816003
(2-16),(20-24),(1-17),(21-25)
2402900003800010001
(66-70),74,(1-11)
2402900004000010002
2,6,14,16,20,30
2402900000400010001
04239834002
(1-9),15,19,21,27,29
2402900000400010002
(4-6),1,5,(11-15)
2402900003800030001
2402900001600020001
04239816002
(4-12),(18-22),(1-11),(15-21)
2402900001600010001
2402900004100010001
663826
04239828001
2402900004100020001
2402900004100030001
2402900004100040001
(2-28),(1-13),(17-21),25,27,(31-37)
2402900004100050001
(4-10),(1-5),(9-21)
2402900004100060001
2402900004100070001
2402900002300010001
04239828003
(2-6),10,14,16,(22-28)
2402900002300020001
(1-9),(13-19),(23-27),31,(35-47)
2402900002300020002
2402900002900010001
04239828006
2402900006700010001
04239828005
2402900006000010001
04239828007
2402900006000020001
2402900000500030001
663840
04239810002
(2-4),(8-24),(1-5),7,25
2402900000500020001
2402900000500040001
(2-20),(1-5),13,19
2402900000500010001
2402900002400010001
04239554001
2,4,10,1
2402900002600040001
04239554003
2402900002600030001
2402900002600020001
2402900002600060001
2,8,(14-18),22,1,5,(9-23),29
2402900002600010001
2402900002600050001
2402900004600010001
663830
04239560000
2402900004600030001
(1-5),11
2402900004600020001
(2-8),12,14,18,20,(24-48)
2402900001300010001
04239840003
(1-21),41,43
2402900001300010002
4,1,7,9
2402900001200010001
04239840004
2402900005800420001
(2-14),20,32,(1-19),(23-27)
2402900005800410001
(2-8),(12-18),(22-30)
2402900005800390001
1,(5-21),25,31
2402900005800390002
(2-6),18,22,24,(28-32),(1-17)
2402900005800380001
(2-4),10,16,26,28,34,36,(42-50)
2402900005800280001
(1-11),17,19,(27-37),(41-51),55,57
2402900005800280002
(61-65),69,71
2402900005800280003
2402900005800040001
(2-24),30,(1-3),(9-21),(25-29)
2402900005800050001
(33-53),(57-61)
2402900005800050002
(2-6),8,14,(18-24),(30-34),38,44,46
2402900005800080001
3,(7-21),29,35,39,43,45
2402900005800080002
(2-4),10,14,32,1,(5-7),13,21,25,27
2402900005800090001
4,10,16,(22-28),(3-5),9,(13-17)
2402900005800240001
6,(12-20),26,30
2402900005800030001
10,(18-20),24,28,30,34,36
2402900005800020001
(9-13),(17-25),(29-35),47
2402900005800020002
1,(9-13)
2402900005800060001
(2-14),18,20,24,26,30,42,44,(48-54)
2402900005800320001
1,(5-11),(15-27),31,35,37,49,(53-61)
2402900005800320002
10,16,(22-24),28,(32-64)
2402900005800170001
(7-23),(29-41),47
2402900005800170002
4,8,10,18,(22-26),(30-36),(46-58)
2402900005800430001
(62-72),7,11,13,19,(23-31),35,(49-55)
2402900005800430002
2402900005800430003
(2-10),24,28,30,1,(7-11),(15-21)
2402900005800360001
(2-8),14,28,34,42,50,54,62,64,70,74,76
2402900005800140001
88,94,(1-3),(9-11),(15-19),(33-45)
2402900005800140002
(2-10),(18-34),38,40,1,(11-49)
2402900005800370001
2,(8-12),(102-106),(1-13),17,19,23
2402900005800340001
2402900005800340002
2402900005800330001
2402900005800010001
(2-6),12,(18-20),(28-32),(40-44)
2402900005800260001
(48-54),(5-11),15,21,(41-43),49
2402900005800260002
2,(8-12),16,(20-26)
2402900005800220001
1,(5-15),19,(25-31),(35-43)
2402900005800220002
(4-8),14,18,22
2402900005800350001
3,(7-17),(21-25),(31-35),41,(47-49)
2402900005800350002
12,16,20,24,(30-32),(13-15)
2402900005800200001
(2-6),10,12,18,(17-19),23,27
2402900005800310001
(6-8),(12-24),30,36,(42-48)
2402900005800230001
(11-15),21,(35-37)
2402900005800230002
(2-8),(12-16),20,(24-26)
2402900005800120001
(1-7),11,21
2402900005800120002
2,6,(10-14),(20-28),1,(7-13),19
2402900005800150001
2,10,(14-20),3,(9-15)
2402900005800300001
(2-6),14,(20-24),(36-38),(42-44)
2402900005800190001
(50-54),(3-13),(23-27),(37-41),45
2402900005800190002
(49-57),61
2402900005800190003
(4-6),(1-3),9,(13-15)
2402900005800070001
(2-10),(14-36),42,3,41
2402900005800100001
43,(49-53),(57-59),63,(67-69),73,75
2402900005800230003
(85-87),(95-97),(101-103),(109-119)
2402900005800230004
52,58,(68-76),80,84,92,(100-110),114
2402900005800230005
120,(124-130)
2402900005800230006
2,(6-22),26,(30-40),44
2402900005800160001
(1-3),7,(11-37)
2402900005800160002
(2-4),(8-14),18,22,26,32,(36-44)
2402900005800270001
(48-58),(3-25),(29-43)
2402900005800270002
2402900005800110001
(2-26),(3-49)
2402900005800130001
6,(10-12),(5-7)
2402900003301060001
663841
04239554000
(4-8),(16-34),1,(5-13),17,(21-23)
2402900003301020001
2402900003301210001
(2-26),30,34,(38-42),46,(54-58)
2402900003301090001
(62-66),(1-29),(33-51),(55-79),83,85
2402900003301090002
2402900003301100001
(2-12),(1-3),9
2402900003301120001
(2-8),(12-18),22,1,(5-17),23
2402900003301110001
(8-38),(46-48),(52-60),(64-68),72,82
2402900003301150001
90,94,96,(100-106),110
2402900003301150002
(3-25),31,33,39,41,45,47,53,(55-73)
2402900003301150003
79,85,89,97,99,(105-109),113,119
2402900003301150004
(123-125),129
2402900003301150005
2,6,(1-5)
2402900003301160001
(2-4),(8-12),18,32
2402900005800180001
(1-3),(9-11),15,(31-33)
2402900005800180002
(2-4),(10-18),(28-36),46,48,(52-66)
2402900003300980001
5,(15-19),(23-31),35,39,(49-61),65,67
2402900003300980002
4,(8-12),(18-32),1,5,(9-17),(21-27)
2402900003300940001
2,6,(11-15)
2402900003301080001
(4-6),(10-14),18,20,24,26,30,32,38,40
2402900003301050001
42,(48-54),(58-62),1,(7-13),(17-35)
2402900003301050002
(2-34),(52-56),(1-45)
2402900003301170001
(8-16),(9-25),29,31,39
2402900003301130001
(140-148),(152-180),(141-179)
2402900003301150006
(2-36),(1-19)
2402900003301220001
(4-52),(1-3),(7-33)
2402900003301070001
2402900003301140001
2402900003301180001
(2-6),(5-9)
2402900003300170001
2402900003300790001
(2-4),(1-17)
2402900003300880001
(6-10),(14-18)
2402900003300060001
(4-8),(12-24),28,30,(36-54)
2402900003300370001
(1-27),(31-39),(49-57)
2402900003300370002
2402900003300900001
2402900003300950001
2,(6-12),(20-24),(1-7),(11-19)
2402900003300570001
(2-8),(12-28),(32-38),(3-25),31
2402900003300590001
(2-32),(1-25),(29-33)
2402900003300290001
(2-22),(1-9),(13-27)
2402900003300130001
2,(8-34),1,(5-25),(33-47)
2402900003300830001
2,(8-18),(1-7),(11-15)
2402900003300540001
(10-80),3,9,(15-83)
2402900003300080001
2402900003300740001
6,(3-5),(9-11)
2402900003300460001
2402900003300720001
2402900003300120001
2402900003300820001
(2-4),1,5
2402900003300270001
2,(6-18),(3-9)
2402900003300890001
(6-16),20
2402900003300300001
(2-6),10,1,(5-15)
2402900003300250001
(2-4),(10-14),(5-9)
2402900003300190001
(2-4),10,(14-18),22,(1-7),(11-25)
2402900003300620001
2,(10-18),(22-26),32,(11-15)
2402900003300210001
2,(6-14),(18-50),54,(58-60),64,66
2402900003300640001
(76-80),(84-96)
2402900003300640002
(1-9),(13-17),(21-25),(29-41)
2402900003300640003
(47-55),(59-63),(67-75),81
2402900003300640004
(4-10),1,5
2402900003300930001
(2-6),(14-18),(1-11),19,(23-25)
2402900003300090001
(2-4),10,12,18,20,(1-13)
2402900003300440001
2,(6-8),(1-3),(11-13)
2402900003300760001
2402900003300050001
(2-8),(14-26),(30-36),(1-5),(9-11)
2402900003300700001
(10-12),(1-3),(7-15),(19-25)
2402900003300230001
2402900003300840001
(2-6),(10-18),1,(5-11),15
2402900003300140001
(2-10),(16-18),(24-30)
2402900003300200001
(1-7),11,(19-29)
2402900003300200002
2402900003301040001
(56-66),70
2402900003300370003
(2-22),(1-3),(15-19)
2402900003300510001
(2-16),(1-3),(9-33)
2402900003300860001
(4-6),(7-9)
2402900003301190001
(2-14),18,22,(26-28),(40-80)
2402900003300040001
1,(7-9),13,(17-19),(25-41)
2402900003300040002
2,(6-8),(14-18),(1-5),(9-15)
2402900003300330001
2402900003300650001
2402900003300490001
2402900003300710001
2402900003300260001
2402900003300610001
2,(6-8),(1-7)
2402900003300150001
2402900003300180001
2402900003300360001
(2-4),(1-19),25
2402900003300580001
(4-8),(3-11)
2402900003300750001
(2-4),8,12,(1-9)
2402900003300550001
2402900003300560001
2402900003300870001
2402900003300920001
2402900003300320001
2402900003300280001
(2-26),1,5,(9-11),17
2402900003300790002
(2-8),12,14,(18-28),(32-38)
2402900003300450001
(1-11),(15-29),35
2402900003300450002
(2-32),(36-60),64,74
2402900003300390001
(1-11),(15-35),(39-55),(59-65)
2402900003300390002
(2-34),38,74,(1-33)
2402900003300680001
2402900003300770001
2402900003300210002
(2-30),(1-9),(13-19),27
2402900003300180002
(4-10),3,(7-9),17,(25-49)
2402900003300220001
2402900003300960001
(2-4),(8-12),(16-30),(34-42),52,1,3
2402900003300410001
(2-24),(28-36),(1-23),(29-33)
2402900003300240001
(2-24),(28-46),50,52,(1-37)
2402900003300670001
(2-14),18,20,(26-34),(1-7),(11-17)
2402900003300400001
21,(25-47)
2402900003300400002
(10-12),(16-44),(1-3),(7-11)
2402900003300500001
2402900003300260002
(2-38),(3-5),(9-41)
2402900003300030001
(6-16),20,(28-42),46,50,52
2402900003300660001
(1-9),(15-17),(23-35),(39-45)
2402900003300660002
(2-8),14,20,22,(1-13),19,(23-27)
2402900003300310001
2402900006600010001
663828
04239804002
2402900005800210001
2402900005800250001
(2-6),(10-14),(1-3),(9-15)
2402900005800400001
2402900005500060001
2402900005300060001
4,12,32,3,(9-11),17,35
2402900004300050001
2402900007000010001
04239557002
(2-6),14,5,21
2402900006500020001
(1-7),11,13,4
2402900006500030001
2402900000500050001
2402900002800010001
04239810003
2402900002800030001
2402900002800040001
2,8,(14-16),20,(1-3)
2402900004700020001
04239810004
(7-9),13,23,27
2402900004700040001
2402900004700050001
2402900004700070001
2402900004700060001
1,4,5
2402900004700080001
2402900004700030001
2402900006800010001
04239000000
2402900005000020001
04239816004
2,8,18,(1-3),25,29
2402900006200010001
04239816005
(1-21),(2-22),(32-42)
2401600000500030001
2401600005000010001
04218804002
2401600005000020001
2401600005000030001
2401600001000010001
2401600001000060001
2401600001000050001
2401600001700160001
2401600002900040001
04218816002
2401600002900020001
2401600002900010001
2401600002900030001
3,8,10,12,14,18,20,24,26,31,50,67,15
2403301500001130005
2403301500000450001
1-6,12,15
2403301500000010001
1,1 ,1¡,1¢,1£,2-6,7,7 ,8-35,(36-50)
2403301500000020001
1-19,(20-28),29-52
2403301500000030001
1,1 ,2,2 ,3,(4-14)
2403301500000040001
1-21,(22-40)
2403301500000050001
2403301500000060001
1-11,(12-18)
2403301500000070001
1,1 ,1¡,2,2 ,3-45,46,46 ,48
2403301500000090001
2403301500000100001
1-5,6,6 ,7-9,(10-14)
2403301500000110001
1-5,9-15,19,23-35,39,41,43,54
2403301500000120001
2403301500000130001
1-16,17,17 ,17¡,(19-32),33,33 ,33¡
2403301500000140001
2403301500000150001
2403301500000160001
1,2,2 ,4,4 ,4¡,6,6 ,8,8 ,10
2403301500000170001
1-10,26,28,30,(34-76)
2403301500000180001
2403301500000190001
1,2,2 ,4,4 ,6,8
2403301500000210001
1-12,13,15,17,19,19 ,21,21 ,23,27,29
2403301500000230001
2403301500000240001
1,1 ,1¡,1¢,2-11
2403301500000250001
2403301500000260001
1,3,4,6,7
2403301500000270001
2403301500000280001
2403301500000290001
1,1 ,1¡,2,2 ,3-9,(10-16)
2403301500000300001
2403301500000310001
1 ,1¡,2-8,9,9 ,9¢,(10-38)
2403301500000320001
1,1 ,3,3 ,4,4 ,5,5 ,7,(8-34)
2403301500000330001
1,2,2 ,2¡,3,3 ,4,5,5 ,7,9,11
2403301500000340001
2403301500000350001
4,6,11
2403301500000360001
1,1 ,3,5-7,8,8 ,9,9 ,9¡,10,10 ,11-27,28
2403301500000370001
28 ,36,36 ,37
2403301500000370002
2403301500000380001
2403301500000390001
2403301500000400001
1-3,4,4 ,5-18
2403301500000410001
2403301500000420001
2403301500000430001
2403301500000440001
1-20,28
2403301500000460001
1-10,11,11 ,12-14,(15-25)
2403301500000470001
2-4,5,5 ,6-9,(10-20)
2403301500000480001
1-31,32,32,33-41
2403301500000490001
2403301500000500001
2403301500000510001
1-7,10,15,16,17,17,(18-28)
2403301500000520001
1,3,5,7-29
2403301500000530001
1-3,(4-16),23
2403301500000540001
1,1 ,2-24,25,25 ,26-29,31,32,32 ,33,33 
2403301500000550001
33¡,(34-38),40,40 ,40¡,42,44,44 ,46,46 
2403301500000550002
52,52 ,52¡,(54-110)
2403301500000550003
2403301500000560001
1-5,6,6 ,7-22,23,23 ,24-118
2403301500000570001
2403301500000580001
2403301500000590001
1-37,(38-48),53,57,58,60,62
2403301500000600001
2403301500001540001
8,10,11,13-15,17,18,20-26,28,30
2403301500000610001
2403301500001550001
1,2,10,17
2403301500000620001
1,1 ,3-4,5 ,5,(6-16),7
2403301500000630001
2,3,11,20
2403301500000640001
(1-9),2,4,(12-36)
2403301500000650001
1,1 ,1¡,2-7,(8-14)
2403301500000660001
1-6,31
2403301500000670001
2-8,9,(11-27)
2403301500000680001
2,5,(6-16)
2403301500000690001
1,2,2 ,3,3 ,4,5,5 ,6-12,13,13 ,14-19,20
2403301500000700001
20 ,(30-37),38,38 ,40-53,54,54 ,54¡,54¢
2403301500000700002
54£,56,56 
2403301500000700003
2,4,6,8,9,(10-20)
2403301500000710001
(2-10),11,(12-36)
2403301500000730001
1 ,1,2-7
2403301500000740001
2403301500000750001
2403301500000760001
2403301500000720001
2403301500000780001
2403301500000790001
2403301500000800001
2403301500000810001
2403301500000820001
2403301500000830001
1,1 ,2-9,11-13,17,21-24,26,28,29,31
2403301500000840001
36-38,40-54
2403301500000840002
2403301500000850001
1,2,2 ,3 ,3¡,3¢,3,4,5
2403301500000860001
1-15,16,16 ,17-28,29,29 ,30-61,62,62 
2403301500000880001
62¡,62¢,63,64,65,65 ,66,67,67 ,67¡,68
2403301500000880002
(71-75),77,77 ,77¡,79,80,80 ,80¡
2403301500000880003
2403301500000890001
3,3 ,5,19
2403301500001510001
1,2,2 ,3-19,(20-24),29
2403301500000900001
(1-19),(20-26)
2403301500000910001
1-6,7,7 ,7¡,9
2403301500000920001
2403301500000930001
1-14,27,26
2403301500000940001
2403301500001520001
1-31,32,32 ,33-38
2403301500000950001
1,1 ,2,2 ,2¡,3,4,6
2403301500000960001
1-19,20,20 ,20¡,20¢,20£,20¤,21-28,29,29 
2403301500000970001
30-39,40,40 ,41-64,65,65 ,66-69,70,70¡
2403301500000970002
71,72,72 ,73-79
2403301500000970003
1-16,17,17 ,17¡,17¢,17£,(18-28)
2403301500000980001
1-15,18,24-27,38-107
2403301500000990001
1-15,16,16 ,17-69,70,70 ,72,72 ,74,76,78
2403301500001000001
2,18,24
2403301500001010001
1,2,3,3 ,3¡,4-10,11,11 ,12-23,(24-34)
2403301500001020001
1-43,49,51
2403301500001030001
2403301500001040001
2403301500001050001
2403301500001060001
1-5,6-21
2403301500001070001
2403301500001530001
1,2,2,3,3,4,21,22
2403301500001080001
1-8,9 ,10-12,16,17,23
2403301500001090001
2403301500001100001
2403301500001110001
1-22,23,23 ,24-37,38,38 ,38¡,39,40
2403301500001120001
2403301500001120002
2400001900100210001
662324
2459
04440554000
2400001900100200001
(1-27),(1-26)
2400001900000020001
662313
04440000000
(3-7),4,6
2400001900100080001
2400001900100100001
2400001900100060001
2400001900100050001
2400001900100260001
2400001900100140001
2400001900100190001
2400001900100110001
2400001900100160001
2400001900100130001
2400001900100180001
(2-26),(3-25)
2400001900100090001
2400001900100120001
2400001900100270001
(4-16),(3-15)
2400001900100030001
2400001900100070001
(4-24),(5-25)
2400001900100040001
(5-11),(6-10)
2400001900100220001
2400001900100150001
2400001900100280001
2400001900100020001
2404200001800010001
662332
04258808004
2404200004200010001
04258808006
2400001900000900001
662311
(2-30),(3-29)
2400001900000700001
2400001900001440001
20,28
2400001900001060001
2400001900001220001
2400001900001280001
2400001900000650001
2400001900000140001
2400001900000730001
2400001900001190001
2400001900000390001
(13-25),(14-24)
2400001900001350001
2400001900001070001
2400001900001330001
662314
2400001900000150001
2400001900000430001
2400001900000420001
(2-6),3,5
2400001900000200001
2400001900001300001
2400001900001100001
2400001900000070001
2400001900000580001
2400001900000160001
2400001900000400001
4,17,18,20,20/1,26
2400001900000050001
2400001900000080001
(7-15),(6-14)
2400001900000090001
14 ,16,16 
2400001900001030001
2400001900000290001
2400001900001090001
2400001900001200001
2400001900001250001
2400001900001260001
2400001900000300001
2400001900001370001
2400001900001110001
2400001900001130001
2400001900000170001
2400001900001120001
2400001900001310001
2400001900000500001
2400001900000890001
2400001900000710001
2400001900001470001
(1-111),(2-110)
2400001900001080001
2400001900001420001
(3-89),(2-90)
2400001900001150001
2400001900001380001
2400001900001390001
2400001900001320001
2400001900001500001
(3-9),(2-10)
2400001900001040001
2400001900000960001
2400001900000030001
662315
2400001900000040001
8,12,12¡
2400001900001010001
2400001900000010001
(5-63),(6-62)
2400001900000280001
2400001900000380001
2400001900000340001
2400001900001240001
2400001900001160001
2400001900000440001
2400001900000410001
(3-21),(4-20)
2400001900000110001
2400001900000270001
2400001900000330001
2400001900000320001
2400001900000350001
2400001900000120001
2400001900000130001
2400001900000240001
2400001900000310001
2400001900000230001
16,20,22
2400001900001680001
(3-101),(2-102)
2400001900000190001
2400001900000260001
(3-53),(2-52)
2400001900000210001
(3-39),(4-40)
2400001900000100001
2400001900000060001
1,4,6
2400001900001170001
48,49,50
2400001900001520001
33,34,35,36,37
2400001900000370001
2400001900000450001
2400001900001230001
2400001900001460001
2400001900001430001
2400001900000180001
2400001900000250001
2400001900001480001
2404200000200050001
04258820002
2404200000200020001
4,6,9
2404200000200090001
2404200000200030001
2404200000200100001
2404200000200010001
2404200000200070001
2404200000200060001
2404200000300010001
662336
04258803002
2404200000300030001
2404200000300020001
2404200004700000001
662322
04440554002
2404200000400010001
662337
04258811003
2404200000400040001
2404200000400020001
2404200000400030001
(5-79),(6-80)
2404200000500040001
04258803001
2404200000500050001
2404200000500020001
(3-19),(2-20)
2404200000500100001
2404200000500140001
2404200000500110001
2404200000500120001
2404200000500150001
2404200000500060001
2404200000500090001
2404200000500070001
(1-209),(2-210)
2404200000500010001
2404200000500080001
2404200000500030001
2404200000600080001
04258820003
2404200000600040001
2404200000600020001
2404200000600090001
2404200000600030001
2404200000600010001
2404200000600050001
2404200000600100001
2404200000700080001
662326
04258813002
2404200000700090001
2404200000700070001
2404200000700100001
2404200000700060001
2404200000700030001
2404200000700010001
2404200000700050001
2404200000700020001
2404200000800010001
04258811002
2404200000800030001
2404200000900020001
04258820004
2404200000900040001
2404200000900030001
2404200000900010001
2404200001000020001
04258803003
2404200001000030001
2404200001000010001
2404200001200020001
04258803004
2404200001200010001
2404200001300630001
662331
04258815002
(3-85),(2-84)
2404200001300720001
(5-103),(4-104)
2404200001300710001
2404200001300620001
2404200001400030001
662334
04258808003
2404200001400010001
2404200001400020001
2404200001400050001
2404200001400040001
2404200001500010001
04258803005
(5-13),(4-14)
2404200001500050001
2404200001500030001
(3-13),(4-14)
2404200001500040001
2404200001500020001
2404200001500060001
2404200001600010001
04258808001
2404200001600070001
2404200001600030001
2404200001600050001
2404200001600040001
(1-215),(2-214)
2404200001600060001
2404200001600020001
2404200001600080001
2404200001700010001
04258808002
2404200001900010001
662335
04258822003
2404200002000020001
04258813005
2404200002000030001
2404200002000010001
2404200002100020001
04258811004
2404200002100010001
2404200002400040001
662328
04258820005
2404200002400010001
2404200002400020001
2404200002400030001
2404200002500070001
04258813003
2404200002500030001
2404200002500050001
2404200002500060001
2404200002500010001
2404200002500020001
2404200002600050001
04258822002
2404200002600020001
2404200002600030001
2404200002600040001
2404200002600010001
(5-123),(4-124)
2404200002700010001
04258815003
2404200002700020001
2404200002800100001
04258811001
2404200002800020001
2404200002800070001
2404200002800090001
2404200002800050001
2404200002800080001
2404200002800010001
2404200002800030001
2404200002800060001
2404200002800040001
(1-127),(2-128)
2404200002900010001
04258811005
2404200003000060001
662321
04258813004
2404200003000020001
2404200003000030001
5,7,15,19
2404200003000050001
(3-61),(2-60)
2404200003000010001
2404200003000040001
2404200003100120001
04258813001
2404200003100020001
2404200003100110001
2404200003100170001
2404200003100040001
2404200003100090001
2404200003100060001
2404200003100070001
2404200003100050001
2404200003100100001
2404200003100030001
2404200003100010001
2404200003100080001
2404200003100130001
2404200003200090001
662330
04258815001
(3-17),(2-18)
2404200003200040001
2404200003200130001
2404200003200060001
2404200003200190001
2404200003200100001
2404200003200070001
2404200003200110001
2404200003200180001
2404200003200140001
2404200003200050001
2404200003200010001
2404200003200120001
(6-10),5,7,9
2404200003200200001
2404200003200080001
2404200003200030001
2404200003300010001
04258815004
2404200003400040001
04258813006
2404200003400020001
2404200003400030001
2404200003400010001
2404200003500010001
04258815005
2404200003500020001
2404200003600030001
04258811006
2404200003600020001
2404200003600070001
2404200003600040001
2404200003600060001
2404200003600050001
2404200003600010001
2404200003700020001
04258808005
2404200003700060001
2404200003800070001
04258820006
2404200003800030001
2404200003800020001
2404200003800080001
2404200003800060001
2404200003900050001
04258820007
2404200003900040001
2404200003900020001
(3-47),(2-48)
2404200003900010001
2404200004000120001
04258820001
2404200004000100001
662327
(7-11),8,10
2404200004000020001
(7-19),(6-18)
2404200004000030001
2404200004000170001
2404200004000440001
2404200004000010001
2404200004000260001
2404200004000470001
2404200004000220001
2404200004000080001
2404200004000190001
2404200004000130001
2404200004000370001
2404200004000140001
2404200004000230001
2404200004000280001
2404200004000430001
2404200004000400001
2404200004000060001
2404200004000110001
2404200004000210001
2404200004000240001
2404200004000180001
2404200004000050001
2404200004000460001
2404200004000490001
2404200004000420001
(3-73),(2-72)
2404200004000360001
2404200004000410001
2404200004000480001
2404200004000270001
2404200004000450001
2404200004000200001
2404200004100110001
04258822001
2404200004100060001
2404200004100010001
2404200004100050001
2404200004100080001
2404200004100070001
2404200004100020001
2404200004100100001
2404200004100030001
5002200020600000001
46241870004
5002200021300000001
143030
46241861001
5002200023800000001
143039
46241867004
5002200024300000001
46241804012
5002200004300000001
143051
46241807004
5002200016900000001
46241861008
5002200005800000001
46241870001
5002200008300000001
143069
46241810003
5002200008400000001
46241858001
5002200009800000001
46241560000
5002200010000000001
143022
46241825001
5002200010100000001
46241834001
5002200010400000001
46241837002
5002200011200000001
143050
46241807002
5002200000500000001
143078
46241843005
5002200000600000001
143002
46241870009
5002200023900000001
143000
46241501000
5002200001700000001
46241867006
5002200002100000001
46241552000
5002200002200000001
46241813003
5002200002300000001
46241870007
5002200004900000001
46241870006
5002200006100000001
46241834004
5002200006400000001
46241825007
5002200026600000001
5002200006900000001
143056
46241855005
5002200027000000001
143070
46241510000
5002200027400000001
5002200011300000001
46241837005
5002200012800000001
46241837016
5002200013400000001
143079
46241849001
5002200027100000001
5002200014900000001
46241834003
5002200015000000001
143031
46241802007
5002200015200000001
46241837007
5002200015300000001
46241870003
5002200015900000001
46241843012
5002200016400000001
143066
46241864014
5002200016600000001
46241867002
5002200017000000001
46241843013
5002200017100000001
46241804007
5002200017200000001
46241834007
5002200017300000001
46241837015
5002200017400000001
46241855003
5002200018300000001
143044
46241858002
5002200018800000001
46241834002
5002200019500000001
46241849002
5002200020400000001
46241837014
5002200021800000001
143054
46241825002
5002200022300000001
46241849006
5002200022500000001
46241825003
5002200023100000001
46241804008
5002200023200000001
46241834010
5002200023600000001
46241834009
5002200003200000001
143059
46241812007
5900000100016050002
4700700100000040001
41420000000
4700700100000040002
188304
4700700100000250001
4700700100000250002
4700700100000340001
4700700100000340002
(2-12),(1-9),15
4700700100000500001
188309
7,(11-17),(18-22)
4700700100000500002
188310
(2-14),16,16,(1-7)
4700700100000680001
(18-28),(9-17)
4700700100000680002
4700700100000730001
6,7,9,9/1,11
4700700100000730002
1,2,4,6-20
4700700100001500001
3,5,21-999
4700700100001500002
4700700100001680001
4700700100001680002
4700700100001740001
4700700100001740002
4700700100000530002
1-39,41,41
4700700100000530001
4700700100000540002
188302
4700700100000540001
188307
4700700020200800001
188333
41218569000
4700700020200800002
188338
(2-32),(1-9),36,46
4700700004600160001
188380
41218554000
34,(38-44),(48-999),(11-999)
4700700004600160002
188381
4700700004600290001
1-23,25-999
4700700004600290002
4700700004600640001
4700700004600640002
4700700004600750001
4700700004600750002
(1-44),(1-25)
4700700004600940001
4700700004600940002
4700700004601330001
4700700004601330002
1,31-999
4700700004601400001
4700700004601400002
(74-999),(55-999),68
4700700004601480001
(2-66),(70-72),(1-53),68
4700700004601480002
(1-32),(1-17)
4700700004601840001
(34-50),(19-47)
4700700004601840002
(92-999),(51-999)
4700700004601910001
(2-90),(1-49)
4700700004601910002
(2-32),(1-7)
4700700004601960001
4700700004602180001
(46-999),(69-999)
4700700004602180002
(1-14),(1-17)
4700700004602200001
(16-999),(19-999)
4700700004602200002
(34-999),(9-999)
4700700004601960002
1-11,12,13-26,31,32,35,36,38,41-999
4700700022800000001
41218844008
1-5,8,8,9,27
4700700018100000001
41218804001
2401300006200020001
663167
04215856001
3,5,(2-6)
2401300006200030001
(4-70),(5-77)
2401300006200050001
2401300006200060001
5,7,(2-10)
2401300006200080001
2401300001500010001
663144
04215809001
1,3,7,8,10,11,12,14
2401300001500150001
2401300001500020001
1,3,4,5,6,7,8,9,10,11,12,14,16,18
2401300001500030001
1,3,11,14,17,29,31
2401300001500040001
2401300001500050001
2401300001500170001
1,2,3,5,7,9,11,13,14,16,18,20,22
2401300001500060001
1,2,6,9
2401300001500200001
1,3,6,9,12,13,15,26
2401300001500080001
3,5,7,9,11
2401300001500090001
2401300001500100001
2,3,4,6,7,8,11,13,15
2401300001500110001
1,4,5,6,7,9
2401300001500120001
2,3,4,5,6,7,8
2401300001500140001
1,9,11,14,15,17
2401300001500160001
2401300001500130001
(1-73),(2-94)
2401300004400010001
663180
04215840001
2401300004400020001
2401300004400050001
2401300004400070001
2401300004400040001
2401300004400060001
2401300004400030001
2401300006800010001
04215840002
2401300006800060001
2401300006800040001
2401300006800030001
2401300006800020001
2401300006800050001
2401300002300150001
663172
04215812001
2401300002300020001
2401300002300030001
(3-31),(6-30)
2401300002300040001
2401300002300050001
2401300002300060001
2401300002300070001
2401300002300080001
2401300002300090001
2401300002300100001
2401300002300110001
2401300002300120001
2401300002300130001
2401300002300140001
2401300003800020001
04215812002
2401300003800010001
2401300000200020001
663147
04215811001
2401300000200250001
2401300000200050001
2401300000200060001
2401300000200100001
2401300000200110001
2401300000200140001
2401300000200240001
2401300000200150001
2401300000200180001
(25-33),(12-32)
2401300000200190001
3,6,8,10,12,34
2401300000200230001
(1-43),(2-130)
2401300000200210001
2401300000200220001
2401800000200010001
663113
2417
04220802001
2401800000200020001
2401800000200030001
2401800001600050001
04220802002
2401800001600020001
2401800001600030001
2401800001600040001
2401800001400010001
04220802006
2401800003300010001
04220802003
2401800004000010001
04220802005
2401800000600010001
663107
04220804001
2401800000600040001
2401800000600050001
2401800000600060001
2401800000600090001
2401800000600080001
2401800003400030001
04220804003
2401800003400020001
2401800003100010001
04220804004
2401800002000100001
04220804002
2401800002000030001
2401800002000090001
2401800002000060001
2401800002000080001
2401800000800010001
663115
04220805001
2401800000800020001
2401800000800030001
2401800000800040001
2401800000800050001
2401800000800260001
2401800000800070001
2401800000800080001
2401800000800240001
2401800000800270001
2401800000800110001
2401800000800120001
2401800000800130001
2401800000800160001
2401800000800170001
2401800000800180001
2401800000800230001
2401800000800250001
2401800000800210001
2401800000800220001
2401800001100010001
663104
04220807001
2401800001100020001
2401800001100030001
2401800001100110001
2401800001100040001
2401800001100050001
2401800001100060001
2401800001100070001
2401800001100080001
2401800001100090001
2401800001100100001
2401800001700030001
663105
04220807002
2401800001700020001
2401800002100010001
663102
04220819001
(1-119),(2-120)
2401800002100030001
2401800002100040001
2401800002100050001
2401800002100060001
2401800002100080001
2401800002100090001
2401800003800010001
04220819002
2401800002400010001
04220825001
2401800002400020001
2401800002400050001
2401800000900010001
04220825002
2401300004500010001
663157
04215841001
(1-55),(2-64)
2401300004500020001
2401300004300010001
04215841002
(1-15),(4-28)
2401300000500020001
663160
04215841004
(1-31),(4-28)
2401300000500010001
2401300004600100001
04215843001
2401300004600020001
2401300004600030001
2401300004600040001
2401300004600120001
2401300004600050001
2401300004600080001
2401300004600090001
2401300004600130001
2401300004600110001
2401300003400010001
04215843004
2401300003200010001
04215821001
2401300003200030001
2401300003200020001
(7-9),(4-8)
2401300003200040001
2401300000400030001
04215819005
2401300000400020001
2401300000400010001
2401300003100010001
04215819001
(3-41),(2-26)
2401300003100060001
2401300003100030001
2401300003100020001
2401300003100050001
(1-3),(4-8)
2401300003100040001
2401300002800020001
04215819003
2401300002800010001
2401300001100010001
04215819002
2401300005500010001
04215819004
2401300001200010001
663145
04215808001
2401300001200030001
2401300001200040001
2401300001200050001
2401300001200060001
2401300001200070001
2401300001200090001
(27-41),(2-52)
2401300001200100001
2401300001200110001
2401300001200120001
2401300001200130001
2401300001200150001
2401300001200160001
2401300001200170001
2401300001200210001
2401300001200190001
2401300001200200001
2401800002300030001
663110
04220824001
2401800001000010001
04220824003
1,2,8,9
2401800003500020001
04220824002
4,5,8,13,15,17
2401800003500030001
2401800002800010001
663106
04220831001
2401800002800020001
(1-69),(4-82)
2401800002800030001
2401800002800040001
(11-39),(2-40)
2401800002800050001
2401800003200010001
04220831002
2401800003200020001
2401800003200030001
2401800003200040001
2401800000300010001
04220831003
2401800000300020001
2401800000500010001
04220831004
2401800003000010001
04220834001
2401800003000020001
2401800003600010001
04220834002
2401300000800010001
663183
04215839002
2401300000800020001
2401300004200030001
663182
04215839001
2401300004200040001
2401300004200050001
2401300004200080001
(1-103),(2-80)
2401300004200090001
(3-47),(2-62)
2401300004200100001
(7-65),(12-62)
2401300004200110001
2401300004200130001
2401300004200140001
2401300004800090001
663169
04215846001
2401300004800150001
2401800000100010001
663100
04220813001
2401800000100030001
2401800000100040001
2401800000100020001
(7-33),(10-38)
2401800000100050001
2401800000100500001
2401800000100070001
2401800000100080001
2401800000100090001
2401800000100100001
2401800000100110001
2401800000100120001
2401800000100130001
2401800000100140001
2401800000100150001
2401800000100160001
2401800000100490001
2401800000100180001
2401800000100200001
2401800000100210001
2401800000100220001
(5-29),(8-62)
2401800000100230001
2401800000100240001
2401800000100250001
(3-21),(2-18)
2401800000100260001
2401800000100270001
2401800000100280001
2401800000100290001
2401800000100310001
2401800000100320001
2401800000100330001
2401800000100340001
2401800000100350001
2401800000100360001
2401800000100370001
2401800000100380001
2401800000100390001
(1-223),(2-226)
2401800000100400001
2401800000100510001
2401800000100410001
2401800000100430001
2401800000100520001
2401800000100440001
2401800000100450001
2401800000100460001
2401800000100470001
2401800000100480001
2403200003000010001
663128
2431
04245810001
2403200003000020001
2403200003000030001
2403200000800010001
04245810002
2403200000800020001
2403200002000010001
04245810003
2403200001800010001
04245810005
2403200001200010001
04245810006
2403200003400010001
04245810004
2401300001000460001
663148
04215807001
2401300001000470001
(1-37),(2-76)
2401300001000010001
2401300001000030001
(9-77),(10-20)
2401300001000040001
2401300001000050001
2401300001000430001
2401300001000080001
2401300001000090001
1,8,10
2401300001000100001
2401300001000110001
2401300001000120001
2401300001000130001
2401300001000140001
2401300001000420001
2401300001000150001
2401300001000160001
1,1,(2-12)
2401300001000170001
2401300001000180001
2401300001000190001
2401300001000440001
2401300001000200001
2401300001000400001
(1-9),14
2401300001000410001
2401300001000490001
2401300001000250001
2401300001000270001
(21-59),(20-80)
2401300001000280001
(1-5),(2-40)
2401300001000290001
2401300001000300001
(1-139),(2-148)
2401300001000310001
2401300001000450001
2401300001000480001
(9-29),(6-30)
2401300001000320001
2401300001000330001
2401300001000340001
2401300001000350001
2401300001000360001
2401300001000370001
2401300001000390001
2401300001000380001
5,6,10,12
2401300000600040001
04215807004
2401300000600010001
2401300000600020001
2401300000600030001
(1-11),4,6
2401300000600050001
2401300001400020001
04215807005
2401300001400010001
2401300006700020001
04215807003
2401300006700010001
(1-73),(2-42)
2401300004900010001
04215807002
2401300004800120001
2401300004800020001
2401300004800030001
2401300004800080001
2401300004800040001
(1-19),(6-18)
2401300004800050001
2401300004800140001
2401300004800100001
2401300004800130001
2401300004800060001
(1-35),(6-28)
2401300004800070001
(1-23),6
2401300006900020001
663170
04215858001
2401300006900240001
(1-103),(2-82)
2401300006900040001
2401300006900050001
2401300006900060001
2401300006900070001
2401300006900280001
2401300006900230001
2401300006900090001
(1-63),(4-64)
2401300006900100001
(1-55),(4-68)
2401300006900110001
2401300006900120001
2401300006900270001
(3-15),2
2401300006900140001
2401300006900150001
2401300006900260001
2401300006900170001
2401300006900180001
(3-57),(2-80)
2401300006900200001
2401300006900290001
(3-19),(2-22)
2401300006900220001
(5-45),(2-42)
2403200000300010001
663120
04245801001
2403200000300020001
2403200000600030001
04245804001
2403200000600020001
2403200000600010001
2403200002600010001
663123
04245804003
2403200003700010001
04245804004
2403200001100050001
663124
04245816001
2403200001100020001
2403200001100030001
2403200001100040001
2403200001100060001
2403200001500020001
04245816002
2403200001500010001
2403200002400020001
04245816004
2403200002400010001
2403200002100010001
04245816003
2403200001300020001
663125
04245817001
2403200001300030001
2403200001300040001
2403200001300050001
2403200001300070001
2403200001300010001
(1-59),(4-52)
2403200001300080001
2403200001300090001
2403200001300100001
2403200001300110001
2403200001300120001
2403200001300130001
1,11,17
2403200001300190001
(3-37),(2-32)
2403200001300140001
2403200001300150001
(1-35),(4-40)
2403200001300170001
2403200001300180001
(3-9),(2-8)
2403200002500010001
04245817002
(1-7),(2-6),28
2403200002500020001
2403200002500030001
2403200002500040001
2403200002500050001
2403200000500010001
04245817003
2403200000500020001
2403200001600070001
04245819001
(3-27),(10-36)
2403200001600010001
2403200001600020001
2403200001600040001
2403200001600050001
(3-31),(4-38)
2403200002200010001
04245819002
2403200001900010001
04245819004
2403200003200010001
04245819003
2403200000100010001
04245825001
2403200000100290001
2403200000100360001
2403200000100020001
2403200000100030001
2403200000100370001
(3-23),(2-42)
2403200000100050001
2403200000100060001
2403200000100070001
2403200000100080001
2403200000100090001
2403200000100100001
2403200000100110001
2403200000100120001
2403200000100130001
2403200000100140001
2403200000100150001
2403200000100160001
2403200000100170001
2403200000100180001
2403200000100190001
2403200000100200001
2403200000100210001
2403200000100220001
2403200000100230001
2403200000100240001
2403200000100250001
2403200000100260001
2403200000100270001
2403200000100280001
2403200000100300001
2403200000100310001
2403200000100350001
2,11
2403200000100380001
2403200000100320001
2403200000100330001
2403200000100340001
2403200003100010001
663129
04245802001
2403200003100020001
2403200003100030001
2403200003100040001
(1-13),(2-6),14
2403200003100050001
2403200003100080001
2403200003100060001
2403200002700010001
04245802005
2403200000400010001
04245802002
(3-23),(4-6)
2403200000400070001
2403200000400080001
(1-3),(2-28)
2403200000400060001
2403200000400020001
(1-3),(4-16)
2403200000400050001
2403200000400030001
2403200001700010001
04245802003
2401300001300030001
663158
04215810001
2401300001300040001
2401300001300010001
(1-31),(2-6)
2401300001300020001
2401300001900010001
04215810002
2401300001900020001
2401300005000020001
04215810003
2401300005000010001
2401300001500210001
2401300001500190001
2401300003900010001
663140
04215837001
2401300003900020001
2401300003900030001
2401300003900050001
2401300003900060001
2401300003900180001
2401300003900090001
2401300003900100001
2401300003900110001
2401300003900120001
2401300003900130001
(1-29),49,(2-52)
2401300003900140001
2401300003900150001
2401300003900160001
(1-21),(2-42)
2401300003900170001
2401300006500010001
04215837004
2401300002400010001
04215837003
2401300002000010001
04215837002
2401300002000080001
2401300005100010001
04215837005
2401300006100020001
04215858005
2401300006100010001
2403200003500070001
04245842000
2403200003500040001
2403200003500020001
2403200003500030001
2403200003500060001
2403200003500010001
04245842001
2403200003500050001
2401300000300020001
663141
04215802001
2401300000300240001
2401300000300030001
2,19,19
2401300000300250001
2401300000300050001
2401300000300070001
2401300000300080001
(1-5),4,22
2401300000300090001
2401300000300100001
2401300000300110001
2401300000300120001
2401300000300130001
2401300000300160001
2401300000300190001
2401300000300200001
(1-43),(6-34)
2401300000300210001
2401300000300230001
(1-19),(4-12)
2401300007300010001
04215802004
2401300006000020001
04215802002
2401300006000010001
2403200001600060001
2401800001800010001
04220816001
2401800001800020001
2401800000700020001
04220816002
2401800001500020001
04220816003
2401800002700010001
663103
04220828001
2401800002700020001
2401800002700030001
2401800002700080001
2401800002700050001
2401800002700070001
2401800000400010001
04220828002
2401800000400020001
2401800002600020001
04220828003
1,5,10
2401800001200010001
04220810001
(1-9),6
2401800001200020001
2401800001200030001
2401800001200040001
2401800001200060001
2401800001200070001
2401800001200080001
(3-17),6,16,18
2401800002200020001
04220822001
(9-49),(12-50)
2401800002200030001
11,(12-18)
2401800002200040001
2401800002200050001
(3-9),(2-16)
2401800002200070001
(5-23),(2-28)
2401800002200080001
(3-29),(2-40)
2401800002200090001
2401800002200100001
2401800002200120001
2401800002200230001
2401800002200140001
2401800002200150001
(1-9),6,12
2401800002200160001
9,15,(10-24)
2401800002200170001
(5-15),(4-20)
2401800002200180001
2401800002200190001
(11-53),(2-50)
2401800002200200001
(1-13),(6-12)
2401800002200210001
(3-19),(4-20)
2401800002200220001
2401800002500010001
663111
04220822002
2401800002500020001
(3-13),(2-16)
2401800002500040001
2401800002500050001
2401800002500060001
2401800002500080001
1,3,11
2401800002500100001
(3-37),(2-22)
2401800002500110001
(1-13),(4-8)
2401800002500120001
(3-17),(6-18)
2401800002500140001
2401800002500150001
2401800002500160001
2403200001400010001
04245813001
2403200001400020001
2403200001400030001
2403200003300010001
04245813005
2403200002800020001
04245813004
2403200002800010001
2403200003600010001
04245813007
2403200001000020001
04245813002
2403200001000010001
2403200000700010001
04245813003
2403200003900010001
04245813008
2401300003000060001
663173
04215818001
2401300003000010001
2401300003000020001
2401300003000030001
2401300003000080001
2401300003000090001
(5-15),(2-14)
2401300003000070001
2401300003000040001
2401300003000050001
(5-17),(4-28)
2401300004700050001
663168
04215555000
2401300004700570001
(3-11),(4-88)
2401300004700080001
(1-43),(6-38)
2401300004700130001
(15-19),(12-26)
2401300004700140001
22,28
2401300004700150001
2401300004700540001
(1-143),(2-136)
2401300004700190001
2401300004700210001
(1-75),(2-84)
2401300004700100001
2,3,20
2401300004700510001
(9-83),(10-78)
2401300004700240001
(1-37),(18-86)
2401300004700250001
11,12,13
2401300004700530001
(1-151),(2-90)
2401300004700270001
3,4,11,17
2401300004700460001
1,9,20,23,27
2401300004700300001
(35-145),(20-144)
2401300004700310001
(3-19),6
2401300004700520001
2401300004700350001
7,13,15
2401300004700490001
(11-25),(14-20)
2401300004700500001
2401300004700390001
(15-65),(2-60)
2400001400000390001
(3-17),(4-132)
2400001400000490001
2400001400000330001
2400001400000470001
2400001400000530001
(1-97),(2-82)
2400001400000830001
(1-25),(4-46)
2400001400000370001
2400001400000930001
663184
2400001400000350001
(27-89),(48-102)
2400001400000370002
2400001400000280001
(1-55),(4-60)
2400001400000640001
(1-63),(4-58)
2400001400000810001
2400001400000200001
(1-75),(2-68)
2400001400000110001
(3-47),(2-44)
2400001400000410001
2400001400000160001
2400001400000630001
2400001400000770001
2400001400000010001
2400001400000560001
2400001400000230001
2400001400000540001
(1-11),(4-8)
2400001400000740001
2400001400000680001
2400001400000660001
2400001400000150001
2400001400000590001
2400001400000420001
2400001400000070001
2400001400000790001
2400001400000650001
2400001400000750001
(69-183),(68-138)
2400001400000280002
(59-223),(62-208)
2400001400000640002
(17-55),(24-70)
2400001400000060001
(1-99),(2-142)
2400001400000260001
2400001400000720001
10,16,(44-78)
2400001400000160002
(7-95),(8-74)
2400001400000520001
2400001400000850001
(7-83),(4-94)
2400001400000820001
(3-31),(8-22)
2400001400000210001
2400001400000040001
2400001400000670001
(1-11),(4-12)
2400001400000400001
2400001400000440001
2400001400000500001
2400001400000360001
2400001400000300001
2400001400000320001
2400001400000020001
2400001400000460001
2400001400000840001
2400001400000580001
(43-65),(20-58)
2400001400000250001
2400001400000130001
2400001400000690001
2400001400000600001
(1-45),(6-50)
2400001400000920001
2400001400000030001
2400001400000710001
(3-47),(2-60)
2400001400000310001
(3-11),(4-16)
2400001400000510001
(1-37),(20-30)
2400001400000700001
3,(6-10)
2400001400000270001
(15-151),(14-144)
2400001400000540002
(65-109),(60-100)
2400001400000810002
(1-115),(2-110)
2400001400000100001
2400001400000760001
2400001400000620001
2400001400000080001
2400001400000340001
(7-55),(12-80)
2400001400000220001
2400001400000380001
(5-9),(22-48)
2400001400000290001
2400001400000170001
(7-57),(4-70)
2400001400000610001
(9-47),(6-50)
2400001400000120001
2400001400000180001
2400001400000090001
(5-11),6
2400001400000190001
2400001400000430001
(91-167),(104-164)
2400001400000370003
2400001400000570001
2400001400000240001
(1-65),(2-76)
2400001400000780001
1,(4-12)
2400001400000860001
(7-41),(6-54)
2400001400000800001
2400001400000050001
2400001400000550001
2400001400000730001
(1-13),16
2401300006400010001
663149
04215857001
2401300006400090001
2,3,13
2401300006400020001
2401300006400040001
2401300006400060001
(3-41),(10-16)
2401300006400070001
2401300006400080001
1,13,18
2401300005900110001
663161
04215855001
7,8,12
2401300005900100001
2401300005900080001
2401300005900030001
(1-61),(2-80)
2401300005900060001
2401300005900090001
2401300006600110001
04215855002
2401300006600060001
2401300006600100001
2401300006600090001
2401300006600030001
2401300005600030001
04215849001
2401300005600010001
2401300005600020001
2401300004100030001
663176
04215834001
2401300004100060001
2401300004100020001
8,9,11
2401300004100070001
2401300004100050001
2401300004100090001
2401300004100100001
(1-71),(2-36)
2401300004100010001
2401300004100080001
2401300004000090001
663163
04215825001
2401300004000160001
2401300004000080001
2401300004000150001
2401300004000140001
2401300004000030001
2401300004000040001
2401300004000050001
2401300004000070001
2401300004000060001
2401300004000100001
2401300004000110001
2401300003500020001
04215825002
2401300003500010001
2401300005200010001
04215825003
2401300002200010001
663162
04215825004
2401300005800010001
663143
04215852001
2401300005800020001
2401300005800200001
2401300005800030001
2401300005800040001
2401300005800050001
2401300005800070001
2401300005800080001
2401300005800170001
2401300005800090001
2401300005800060001
2401300005800100001
2401300005800110001
(5-17),(6-16)
2401300005800120001
2401300005800140001
2401300005800130001
2401300005800150001
2401300005800160001
(1-25),(4-6)
2401300005800180001
2401300005800190001
2401300006300010001
04215852002
32,33,35,36,41,45,46,52
2400001600004360001
53,57,58,63,74
2400001600004360002
(2-66),(1-27)
1300000100001380001
1300000100001390001
11,11,11,12,12,15,15,2,6,6
1300000100002090001
1,10,1,2,21,3,5,7,9
1300000100002090002
4,8,10
1300000100002230007
65
1300000100002200003
5200300000600000001
22203810001
5200000100004690001
(1-13),14-99
5200000100004690002
5203200007500000001
606132
22242832003
(102-112)
3800000300001400007
(1-15),17
3800000300007010001
(17-999),(8-998)
3800000300007010002
3800000300002640003
7102400009300000001
301234
70248852006
(1-301),(2-302)
7102200003700000001
301633
70244820001
(36-56),39,43 ,(45-53)
7400001000000160002
456300
7415
75442000000
7400001000000200001
(1-21),(2-40),5 
7400001000000170001
456302
(10-32),6,5,(9-35)
7400001000000160018
456304
7400001000000280002
(2-62),(1-33)
7400001000000230001
456305
­(1-29),(2-6)
7400001000000290001
7400001000000190001
456313
(2-28),7
7400001000000240001
(1-91),44 ,(2-30)
7400001000000260001
456315
(1-7),8
7400001000000250001
456316
(19-41),(28-42)
7400001000000200010
456317
(150-170),(155-169)
7400001000000530001
(1-53),(6-38)
7400001000000310001
456323
(2-110),(1-121)
7400001000000440001
(2-294),(1-229)
7400001000000480001
(2-10),(11-85)
7400001001600030001
456384
75442000008
7400001002900050001
456390
75442000022
7400001002700020001
456382
75442000021
7400001002700030001
(4-20),(7-19)
7400001000800020001
456381
75442000002
7400001002600010001
456386
75442000019
7400001003500030001
456387
75442000026
(90-102),(195-305)
7400001000000670001
(78-152),(83-155)
7400001000000580001
7400001000000080001
456303
(1-29),30
7400001000000720001
7400001000000790001
(18-70),(33-81),49 
7400001000000580076
7400001000000700001
(2-76),(1-81)
7400001000000730001
7400001000000750001
7400001000000770001
7400001000000600001
456306
7400001000004820001
7400001000000630001
(36-108),58 ,(33-111)
7400001000000640001
(4-60),27 ,(1-27)
7400001000000650001
7400001000000690001
7400001000000580109
7400001000000610001
(2-98),(1-97)
7400001000000760001
7400001000000780001
7400001000000560001
(2-34),(1-147)
7400001000000670064
(70-80),(167-193)
7400001000000670065
(2-8),42 ,(5-11)
7400001000000590001
456318
(10-34)
7400001000000590002
7400001000000590003
(2-290),(1-221)
7400001000000070001
7400001000000640015
(38-128),(3-77)
7400001000000720016
7400001001600040001
7400001002900060001
7400001003700040001
456383
75442000027
7400001002700040001
7400001001900060001
75442000011
(2-38),(1-31),19 ,31 
7400001000000880001
(4-14),(1-5)
7400001000000220001
(2-156),(1-155)
7400001002900010001
7400001002700180001
7400001002600130001
7400001003500020001
(80-150),(79-115)
7400001000000530010
7400001000000500001
7400001000000320001
7400001000000400001
(2-38),(1-47),63
7400001000000530015
(48-62),78
7400001000000530016
7400001000000350001
7400001000000490001
7400001000000520001
7400001000000380001
7400001000000300001
(112-190),(123-179)
7400001000000440117
7400001000000450001
(2-52),(1-31)
7400001000000390001
7400001000000420001
(2-30),(1-57),61
7400001000000330001
7400001000000800001
7400001000006450001
7400001000000970001
7400001000000840001
7400001000000850001
(6-8),(17-21),1,3,13,1 ,12
7400001000000920001
(10-22),(1-11),(17-25),15,4,8
7400001000000830001
7400001000000810001
7400001000000910001
7400001000000940001
7400001000000930001
7400001000000860001
7400001000000900001
7400001000000960001
(2-18),(20-28),(1-9),(11-19)
7400001000000980001
(2-132),(7-161)
7400001000000870001
(2-16),(13-23),18,(22-24),(27-35)
7400001000000950001
(32-36),(40-46),(50-54),1,7
7400001000000950002
(2-80),(1-67),(71-93)
7400001000000990001
(8-64),(35-169)
7400001000000970002
(2-130),(1-103)
7400001000000890001
7400001001600050001
(12-14),(9-13),(20-28),(17-29),33,34
7400001001900070001
7400001000001200001
7400001000001030001
(2-44),(1-7),7 ,50 
7400001000001220001
7400001000001000001
(2-8),(1-3)
7400001000001040001
7400001000001110001
7400001000001130001
7400001000001020001
(2-22),(1-61)
7400001000001140001
7400001000001180001
7400001000001070001
7400001000001050001
7400001000001150001
7400001000001190001
(2-58),(1-5),(9-15)
7400001000001160001
(76-150),(91-171)
7400001000001080001
7400001000001170001
(16-18),(19-23),1,1,8,12
7400001000004800001
(20-22),(9-11),15
7400001000004800002
7400001000001200002
7400001000001200003
(2-10),2
7400001000001120001
456320
7400001000001010001
7400001000001060001
7400001000001080008
7400001001600060001
7400001001600070001
7400001002900090001
7400001002600030001
7400001000001240001
7400001000001250001
(2-186),(1-185),176 
7400001002900100001
(2-60),(1-69),10 ,51 
7400001000001270001
2,6,8,12,16,3,7,9
7400001000001320001
7400001000001340001
7400001000001400001
7400001000006460001
(2-72),(1-33)
7400001000001420001
7400001000001390001
7400001000001400008
(2-42),(5-63),24
7400001000001410001
(4-92),(1-91),72
7400001000001350001
7400001000001430001
7400001000001380001
7400001000001370001
(2-24),(13-35)
7400001000001440001
(4-64),(3-63)
7400001002900110001
(2-58),(1-45)
7400001000001360001
(2-72),(3-69),7 ,32 
7400001000001460001
(1-13),(14-26),(27-47)
7400001002900230001
7400001002700050001
7400001001100030001
75442000004
7400001001900080001
7400001003900000001
75442000005
7400001002600100001
7400001003500040001
(94-128),(87-113),87,89,91,93,116
7400001000001510001
7400001000001520001
(32-88),(23-81),88
7400001000001510038
7400001000001490001
7400001000004870001
7400001000001510046
(2-6),(1-3),3
7400001000001540001
(130-134),(115-119)
7400001000001510048
7400001000001530001
(2-12),(5-17),5,9,9,15,33
7400001000001500001
7400001001600300001
(1-49),26,30,12,11
7400001000000120001
7400001002900130001
7400001002900140001
(10-12),4,11
7400001000001610001
(7-9),3,13,17
7400001000001730001
7400001000001560001
7400001000001720001
7400001000001940001
7400001000002010001
7400001000001670001
7400001000001690001
(12-24),(17-35),13,45,47,28
7400001000001570001
(2-64),(1-17)
7400001000001600001
7400001000001590001
(2-84),(1-95)
7400001000001650001
7400001000001760001
7400001000001850001
7400001000001900001
7400001000001930001
7400001000001960001
(2-20),(1-79)
7400001000001980001
(2-32),(3-33)
7400001000001970001
(2-42),(1-49)
7400001000001770001
7400001000001860001
7400001000001830001
7400001000001620001
(30-42),(1-23)
7400001000001640001
7400001000001640018
(2-42),(1-43),57,58
7400001000001950001
(86-112),(95-157)
7400001000001780001
(108-170),(107-169)
7400001000001920001
(40-58),(1-29),(2-30)
7400001000001480001
(2-52),(1-7)
7400001000001810001
(2-30),(1-54)
7400001000001870001
7400001000001890001
7400001002400060001
75442000017
7400001002400030001
(4-6),(3-5)
7400001002400070001
7400001000001580001
(42-118),39
7400001000001670003
(2-30),(4-52)
7400001000001710001
7400001000001780011
(18-120),(3-119)
7400001000002030001
(2-54),(1-41)
7400001000002080001
7400001001600130001
(2-90),(1-89)
7400001001600110001
7400001002000040001
456395
75442000012
(2-338),(1-337)
7400001002900210001
7400001003700010001
(2-108),(1-91)
7400001002700060001
7400001002700070001
7400001001900110001
(2-140),(1-143)
7400001003800030001
456388
75442000028
(2-58),(1-37)
7400001003800040001
7400001000002570001
3,7,8,12
7400001000002480001
7400001000002250001
7400001000002300001
(2-16),(1-25)
7400001000002470001
7400001000002230001
7400001000002440001
7400001000002420001
7400001000000140001
7400001000002220001
7400001000002240001
7400001000002310001
7400001000002350001
(2-78),(1-3)
7400001000002360001
7400001000002370001
7400001000002400001
7400001000002490001
7400001000002510001
(2-48),(1-19)
7400001000002540001
(2-28),(1-30)
7400001000002500001
7400001000002330001
7400001000004940001
7400001000002880001
7400001000002210001
7400001000002340001
(2-132),(1-177)
7400001000000130001
7400001000002290001
7400001000006440001
7400001000002560001
(2-28),(1-9)
7400001000002580001
(4-14),18
7400001000002390001
7400001000002260001
7400001000002390007
1,(2-34)
7400001000002520001
7400001000002200001
7400001000002310003
(2-28),(3-13),(52-64),(37-63),36
7400001000004960001
7400001000002380001
7400001000002450001
7400001000002550001
(2-16),(1-3)
7400001002100020001
456394
75442000013
7400001002500030001
75442000018
7400001002100080001
7400001001600010001
7400001001600020001
7400001001600030044
7400001001600140001
7400001001600150001
(2-326),(1-275)
7400001002000010001
7400001001900010001
7400001003800120001
7400001003800050001
7400001003800060001
7400001003500050001
(134-152),(179-197)
7400001000000130035
7400001000002600001
(80-296),(59-243)
7400001000002610001
7400001000002630002
7400001000002720001
(2-22),(3-55)
7400001000002730001
(2-128),(1-85)
7400001000002670001
(12-22),15,2
7400001000002650001
7400001000002660001
(6-18),(5-23)
7400001000002640001
7400001000004720001
(2-4),(1-13)
7400001000002680001
7400001000002690001
7400001000002750001
7400001000002610022
(14-78),(1-57)
7400001000002610023
(2-34),(1-49)
7400001000002700001
(2-66),(1-73)
7400001002100030001
7400001001600160001
7400001001600170001
(8-46),(1-49)
7400001002000020001
7400001002700080001
(2-20),(23-59)
7400001002700090001
7400001000800030001
7400001003500060001
(2-48),(1-45)
7400001003500070001
7400001000002860001
(4-18),2,19,53
7400001000002870001
(6-48),(3-7)
7400001000000110001
7400001000002780001
7400001000002840001
(35-79),(28-74)
7400001000002860003
7400001000002830001
7400001000002850001
7400001000002780002
456311
(84-132),(63-109)
7400001000002770001
(4-24),(9-25),(32-40)
7400001000002840002
(2-74),(9-69)
7400001000002810001
7400001000002820001
7400001000002800001
7400001000002790001
7400001001600180001
7400001002300010001
75442000016
7400001002300010002
(8-12),(9-13)
7400001003700070001
(2-68),(1-77)
7400001002700100001
7400001002700010001
7400001001900140001
(86-156),(93-153)
7400001000002950001
7400001000003000001
7400001000003120001
7400001000003260001
7400001000003280001
(2-160),(1-149)
7400001000003320001
7400001000004850001
(2-108),(3-75)
7400001000003030001
7400001000003180001
(20-84),(31-91)
7400001000002950005
7400001000002910001
7400001000003010001
7400001000003020001
7400001000003110001
7400001000003300001
(2-60),1
7400001000002890001
7400001000003140001
7400001000004840001
(2-84),(3-9)
7400001000002920001
7400001000003000003
7400001000002950011
7400001000002930001
(2-44),(1-17)
7400001000002970001
(4-40),(1-33)
7400001000003040001
7400001000003090001
7400001000003100001
7400001000003230001
(46-80),(1-21)
7400001000003230002
7400001000003120003
12,(1-25)
7400001000003150001
7400001000003130001
7400001000003220001
7400001000002940001
(2-18),(1-9)
7400001000002980001
7400001000003070001
7400001000003190001
(2-36),(3-15)
7400001000003250001
7400001001600190001
7400001001600250001
(2-132),(1-125)
7400001002000030001
7400001002900250001
7400001003700020001
7400001003700060001
7400001002700110001
7400001002700120001
7400001000001830002
7400001000001880001
(2-88),(1-93)
7400001000001910001
(2-162),(1-105)
7400001000001920003
7400001000002000001
7400001002100010001
7400001001600240001
7400001001600080001
7400001001600290001
7400001001600090001
(8-90),(1-7)
7400001001600100001
7400001002900160001
(2-621),(1-61)
7400001002900150001
7400001002900180001
7400001002900200001
7400001001900100001
(2-54),(1-161)
7400001003800010001
7400001003800020001
7400001001400000001
(2-26),(1-55)
7400001000002120001
(6-76),(7-75)
7400001000002090001
7400001000002040001
(2-14),(1-77)
7400001000002140001
(2-36),(1-27)
7400001000002110001
7400001000002050001
(122-162),(121-141)
7400001000002030009
7400001000002160001
7400001000002180001
7400001000002130001
7400001000002150001
7400001000002170001
7400001000002060001
(2-42),(1-37)
7400001000002020001
7400001001900020001
(16-30),(17-31)
7400001001900030001
7400001002600060001
7400001003500080001
(38-42),(73-99)
7400001000003460001
(2-178),(1-185)
7400001000003390001
7400001000003450001
7400001000003360001
(2-24),(1-57)
7400001000003440001
7400001000003410001
(24-32),(19-29)
7400001000003460016
7400001000003380001
(2-64),(1-91)
7400001000003420001
7400001000003430001
7400001000003490001
7400001000003340001
7400001000006130001
7400001000003470001
7400001000003480001
(6-10),(1-15)
7400001000003460026
(1-18),(9-19)
7400001000003370001
(2-12),(1-7),29,(45-77)
7400001000003900001
(4-18),(3-17)
7400001000003420003
(2-56),(1-59)
7400001000003330001
7400001000003400001
7400001000003500001
(6-10),(1-9)
7400001002100040001
7400001002100040005
7400001002700150001
(2-58),(1-57)
7400001003800070001
7400001003500090001
7400001000003740001
7400001000003550001
7400001000003660001
7400001000003580001
7400001000003610001
7400001000003780001
(2-32),(25-67)
7400001000003710001
7400001000003870001
7400001000003920001
7400001000003560001
7400001000003630001
7400001000003650001
7400001000003720001
7400001000003830001
(2-66),(1-63)
7400001000003850001
7400001000003880001
7400001000003790001
7400001000003540001
7400001000003620001
7400001000003530001
7400001000003590001
7400001000004920001
7400001000003910001
7400001000003520001
(2-50),(1-11)
7400001000003760001
7400001000003840001
7400001000003890001
(2-30),(5-29)
7400001000003640001
7400001000003670001
7400001000003680001
7400001000003860001
7400001000003960001
(2-132),(7-191)
7400001000003570003
(4-40),(1-5),(25-141)
7400001000003600001
(2-190),(1-181)
7400001000003730001
(2-8),(3-17)
7400001000003820001
7400001001600260001
7400001001600270001
7400001002900270001
1,29,38
7400001002900320001
(2-90),(1-109)
7400001002700130001
(2-120),(1-119)
7400001002700140001
7400001001900150001
(3-6)
7400001001900170001
7400001001900160001
7400001001900190001
(2-62),(1-7),27,(35-53)
7400001002600080001
7400001002600120001
7400001003500100001
(56-132),(31-97)
7400001000003970001
7400001000004040001
(2-178),(1-85)
7400001000004090001
7400001000004020001
7400001000004100001
(18-54),(17-29)
7400001000003970007
7400001000004190001
7400001003000000001
7400001000003990001
7400001000004000001
7400001000004050001
7400001000004160001
7400001000004150001
7400001000004080001
(4-88),(1-41)
7400001000002190001
(2-26),(1-13)
7400001000003980001
(2-28),(1-63)
7400001000004130001
6,11
7400001000004900001
7400001000004120001
7400001000004140001
7400001001600200001
(2-112),(1-113)
7400001002900280001
7400001003100000001
(2-22),(3-29)
7400001002700160001
7400001003500110001
(84-108),(79-165)
7400001000004260001
7400001000006310001
7400001000004860001
7400001000004230001
7400001000004300001
(6-40),(13-45)
7400001000004260016
(2-48),(1-53)
7400001000004290001
7400001000004290002
7400001000004220001
7400001000004280001
7400001000004240001
7400001000004260024
(112-128),(167-193)
7400001000004260038
7400001000004310001
7400001000004270001
(4-24),(1-25)
7400001000004210001
(2-36),(1-177)
7400001000004250001
7400001003400000001
75442000025
7400001001900200001
7400001000004330001
7400001000004340001
7400001000004390001
7400001000004330004
7400001000004320001
7400001000004370001
7400001000004380001
7400001000004400001
(80-154),(73-175)
7400001000004390009
7400001000004410001
7400001000000460001
7400001000004420001
7400001000004460001
7400001000004430001
(2-38),(1-59)
7400001003300020001
75442000024
(4-42),(3-41)
7400001000800010001
(2-46),(1-77)
7400001001100020001
7400001002600090001
7400001000004570001
(82-314),(65-155),(173-289)
7400001000004500001
(6-250),(1-231)
7400001000004520001
7400001000004490001
7400001000004980001
(22-74),(23-73)
7400001000004560001
7400001000004470001
7400001000004480001
(2-94),(1-89)
7400001000004540001
7400001000004510001
(2-80),(3-63)
7400001000004500019
7400001000004550001
7400001003800110001
(2-50),(1-57)
7400001003500120001
(2-40),(1-55)
7400001000004600001
8,(1-7)
7400001000004610001
7400001000004630001
7400001000004590001
(8-148),(1-181)
7400001000004620001
(10-100),(1-79)
7400001002100050001
7400001001600210001
7400001002000050001
2,(3-5)
7400001002900300001
7400001003700050001
7400001002700170001
7400001002600110001
7400001003800080001
(2-64),(1-93)
7400001000004640001
7400001000004650001
7400001000004660001
7400001000004670001
7400001000004680001
7400001000004690001
7400001002900310001
7400001003500130001
7400001000004710001
7400001000004730001
7400001000004910001
7400001003800160001
19,29,97,100
2500000100001470001
1,2,2 ,3,3 ,4,5,7,8,9,13,14,15,16,18,21
2500000100001470002
21 ,22,24,25,25 ,26,28,30,32,34,36,37,38
2500000100001470003
40 ,41,43,45,47,51,55,92
2500000100001470004
6900600015900020001
6900600004200010001
28210810033
7,35/141
6100000300000310003
(107-133)
6100000300000820001
(114-140)
6100000300000820002
(1-105),(2-112)
6100000300000820003
(2-142)
6100000300000940002
(1-153),165
6100000300000940003
66,66,66,81,81,85,89,89,93
6400000100000340006
28,28
6400000100007690004
6400000100008080005
204
6400000100008580001
(206-210)
6400000100008580010
1,24,24,24,24,71
6400000100008930004
6400000100008930005
6400000100009240005
6400000100009900003
6400000100014450005
48,77
6400000100014450006
6400000100014450007
6400000100000980001
(2-10),20
6400000100000980002
6400000100006480008
6600000100015740001
6600000100015740002
3400000100004780010
198,200
3400000100004780011
(46-92),(21-65)
3401100100002060002
3401100100005330001
4/1,6,8,10,10 ,14,23,32,32 
3400000100030160001
3400000100001600001
3400000100001600002
3400000100014980001
(5-9),15,17,(4-10)
3400000104200000001
3400000104200000002
392 
3400000100027510003
3400000100015230001
3400000100015230002
3400000100015150002
338,354
3400000100027510004
400032
3400000100031840001
(3-147),(14-162)
3402000100001460002
5902000021300000001
614530
57246861014
2,3,4,5,6,7,8,9,10,10 ,11,15,39
2700000100012180002
2700000100014410003
08401000000
30,30,54,71,72,75
2700000100001480009
3,7,9,10,12,13,19,23,28,32,34,(134-144)
1300000100000320002
94,95
5601500100000150001
461501
5646
53425000000
(1-95),(2-92)
5601500100000150002
461504
(54-98),(63-113)
5601500100000050001
461500
5601500100000050002
461505
(94-126),(123-189)
5601500100000940001
(1-121),(2-92)
5601500100000940002
(1-55),2
5601500100000970001
(4-999),(57-111)
5601500100000970002
5601500100000370001
(43-123),(34-90),96
5601500100000370002
92,94,(98-122),125
5601500100000370003
461503
5601500100000910001
(46-74),(47-73)
5601500100000910002
(59-109),(66-126)
5601500100000770001
5601500100000260001
(70-114),(71-119)
5601500100000260002
5601500100000540001
(14-82),(19-131)
5601500100000540002
(84-92),(133-169)
5601500100000540003
5601500100000140001
56,57
5601500100000140002
5601500100000380001
(28-64),(55-97),(72-112),(113-153)
5601500100000380002
(66-70),(99-111)
5601500100000380003
5601500100000670001
(50-106),(55-119)
5601500100000670002
5601500100000330001
(55-107),(70-134)
5601500100000330002
(1-81),(2-50)
5601500100000040001
(83-145),(52-90)
5601500100000040002
5601500100000060001
(24-999),(33-999)
5601500100000060002
1,(5-33),(37-131),(2-22)
5601500100001790001
3,(24-36),35
5601500100001790002
(1-85),(2-46)
5601500100000030001
(48-66),(70-82),(87-119)
5601500100000030002
(1-119),(2-90)
5601500100000510001
(92-118),(121-167)
5601500100000510002
(1-95),(2-40)
5601500100000790001
42,97
5601500100000790002
1-91,98
5601500100000950001
93-97,99-117
5601500100000950002
5601500100000580001
43,53
5601500100000580002
5601500100000110001
58,65
5601500100000110002
(1-105),(2-86)
5601500100000010001
(88-128),(107-163)
5601500100000010002
21,19
5001900100002770001
5001900100002770002
96ª2áâà1,96ª3,96ª4,96ª4áâà3,98ª1,98ª2
7700000000000130092
5ª2,5ª3,5ª4,5ª5,5ª6
7700000000000150005
7700000000000180004
9áâà3,9ª3
7700000000000280018
21,23,23áâà1,24
7700000000000530020
65áâà4,65áâà13,65áâà14,65áâà15,65áâà16
7700000000002410054
11ª3áâà1,11ª4,12,12áâà3,12ª2,12,13
7700000000003300137
160,161,162,163áâà1,163áâà3,163áâà4
7700000000003350116
6áâà2,6áâà3,6áâà4,6áâà5,6áâà6
7700000000003580024
6áâà7,6áâà8,7,7áâà2,7áâà3,7áâà4
7700000000003580025
128ª1áâà4,128ª2,128,130,130áâà1
7700000000004760262
25áâà7,25áâà8,25áâà9,25áâà10,27
7700000000004960161
70ª1,70ª2,70
7700000000007330106
42ª2,42ª2áâà2,44
7700000000007540023
7700000000010240007
23,23áâà1
7700000000012000014
3ª7
7700000000012280083
1,2,2áâà2,2ª1áâà2,2ª2,3,3ª1,3ª1áâà1
7700000000012850008
10áâà20
7700000000014120005
28áâà1,28áâà2
7700000000014870004
90áâà21,90áâà22,95,113
7700000000015780051
16áâà13
7700000000015920007
11áâà7,11,13
7700000000016790030
25,25
7700000000016960014
7700000000017420007
209áâà9,209áâà10,211áâà42,211ª1,211ª2
7700000000018560235
211ª2áâà3,211ª2áâà5,211ª2áâà6,211
7700000000018560236
11ª3áâà1,11ª3áâà2,11ª3áâà3,11ª3áâà4
7700000000018910053
11ª3áâà5,11ª3áâà6,13
7700000000018910054
35áâà2,39áâà1,39áâà2,41áâà2
7700000000018930011
17,54
7700000000021740017
75ª1,75ª2,77
7700000000023740017
54,54
7700000000025920044
107áâà1
7700000000028650050
7700000000029420009
115225
39áâà1
7700000000029640023
7700000000032030020
30ª1,30ª2,32
7700000000034380017
24áâà36,24áâà37
7700000000042430009
92ª5,92ª6,92áâà1,92,92
7700000000070750046
28áâà4,30,32,32áâà1,32áâà2
7700000000073160027
2áâà1,2áâà2,2áâà3,2áâà4,2,2áâà1
7700000000073480004
2áâà2,2áâà3,2áâà4,3ª1,3ª1áâà1
7700000000073480005
3ª1áâà2,3ª1áâà3
7700000000073480006
7700000000073640001
7700000000073650001
4áâà1,8áâà1
7700000000073870001
7700000000073870002
7áâà8,7áâà9,7áâà10,7áâà11,7áâà14,7áâà15
7700000000073870003
7700000000074100001
3,3áâà1,4
7700000000074170001
7700000000074180001
7700000000074190001
7700000000074220001
áâà5
7700000000074220002
7áâà1,7áâà1
7700000000074230001
7700000000074250001
17áâà2,17áâà3,17áâà5,17áâà6,17áâà7
7700000000074260001
17áâà8,17áâà9,17áâà10,17áâà11,17áâà14
7700000000074260002
17áâà16,17áâà1,17áâà2,19
7700000000074260003
1,2,3áâà1,3áâà2,10,11
7700000002600000002
(4-32),(3-19)
6800000400001920001
6800000400001920002
6800000400004370001
6800000400000630004
392004
(8-14),33,37
6800000400000660001
6800000400000660002
(119-143),(175-181)
6800000400000870003
43,45,49
6800000400000140003
11-53
6800000400000620003
6800000400004510008
6800000400002100003
71/1,51,55
6800000400003120005
1,1/4,5,5,5/12,7
6800000400004810008
1-42,(45-55)
6800000400000690001
(59-63)
6800000400000690002
6800000400003200001
(42-78),(39-55)
6800000400004900003
6800000400002140003
(14-24),(9-13)
6800000400002630001
4,(8-10),(3-5)
6800000400002630002
1-56,63
5200000100011700003
57-62,64-999
5200000100011700001
5902000009400000001
614520
57246813006
5902000010200000001
57246813014
5902000009100000001
57246813002
5900000100008620004
1-31,47
6700000300003410001
(49-83)
6700000300003410002
(32-96)
6700000300003410003
4
6700000300003450001
1,4,4
6700000300003450002
6700000300003630001
214030
26-37,23,24,24
6700000300003630002
214025
13,21,23
6700000300003680001
1-9,(12-22)
6700000300003680002
5,18,62
6700000300006450001
2,6,6/2
6700000300006450002
6700000300004190001
1,(2-10),12-38,11
6700000300004190002
6700000300003990001
6-57
6700000300003990002
(3-21),4
6700000300000160001
(48-58),67-85
6700000300000160002
214015
(8-22),23-46,(55-65),60
6700000300000160003
6700000300000260001
(4-14),15-178
6700000300000260002
(4-10),48
6700000300000870003
36,41,43
6700000300001870005
2403600001600010001
04251810003
2403600001600030001
2403600001600020001
2403600001600040001
2403600001600050001
2403600003600010001
04251810004
2403600003600020001
2403600003600030001
2403600003000010001
04251810005
2401200004300400001
04214556000
12,(9-17)
2401200004300600001
2401200004300410001
2401200004300040001
2401200004300420001
2401200004300380001
2401200004300330001
2401200004300430001
6,(1-5)
2401200004300590001
2401200004300620001
2401200004300170001
2401200004300090001
(1-9),(21-41),(47-53),(2-70)
2401200004300470001
(1-9)
2401200004300180001
2401200004300190001
2401200004300440001
1-31,33,35,41
2401200004300200001
2401200004300020001
2401200004300390001
2401200004300550001
2401200004300500001
2401200004300540001
(1-5),2,11
2401200004300510001
2401200004300210001
2401200004300220001
2401200004300120001
2401200004300030001
2401200004300230001
2401200004300240001
2401200004300100001
2401200004300260001
2401200004300270001
1-13,(18-22)
2401200004300280001
2401200004300150001
2401200004300290001
1-17,20-24,(25-33)
2401200004300300001
2401200004300050001
2401200004300060001
2401200004300320001
2401200004300350001
2401200004300070001
1-100,(101-143)
2401200004300130001
2401200004300340001
(3-31),30
2401200004300140001
2401200004300360001
2401200004300080001
2401200004300370001
1,5,7,15,17
2401200004300460001
2401200004300560001
2401200004300570001
2401200004300110001
2401200004300580001
2401200003300060001
04214556001
1-31,(32-52)
2401200003300010001
2401200003300030001
2401200003300070001
2401200003300040001
2402900000100760001
2402100003600010001
663475
04224802001
2,3,8-13,18,20,24,28,34
2402100003600190001
2-4,6-10
2402100003600040001
2402100003600050001
3,5,6
2402100003600070001
2402100003600090001
2,6,8,10,(11-19)
2402100003600100001
7,9,13,17
2402100003600110001
6,8,13,15,19
2402100003600120001
3-7,10,12,14,18
2402100003600200001
2402100003600130001
2,4-7,12,15,16,18,19,21,24,24 ,25,27
2402100003600140001
2,3,5-7,10,12,(23-37),36 
2402100003600150001
2402100003600210001
3,8,10,55,59
2402100003600220001
3,4,10
2402100003600170001
(8-14),11,20,(15-21),22
2402100003600180001
2-4,9,22,23
2402100000900030001
04224802003
5,3
2400800002900020001
663449
04209810002
1-8,10-16,18-34,36-57
2400800002900010001
2400800002900030001
2-6,8-10,12-14,16-21,23,27,29,31
2400800000100220001
1-9,(11-23)
2400800000100230001
4 ,5,10
2400800000100250001
2-6,10,11,13,17,19-22,24,26,32,51
2400800000100260001
1-9,11,(15-21)
2400800000100270001
2400800000101330001
1,2,4-12,14,16,17,18
2400800000100280001
3-8,(11-17),18-23,(25-31),32-38,42,44
2400800000100050001
476634
47,48,50,52-57,61,63-68,70,74-76,82
2400800000100050002
2-5,9
2400800000100290001
2400800000100060001
2400800000100070001
2400800000101150001
663433
(1-11),10,8,22,33
2400800000100090001
2400800000100100001
(2-12),13
2400800000100110001
2400800000100120001
2400800000100130001
2400800000100140001
1,3-6,8-17,25-30,32-34,36-40
2400800000100150001
1-5,8-10,12,15,(16-24)
2400800000100160001
1,5-8,10,11
2400800000100300001
2,3,5-12,14-18,20,22
2400800000100180001
2400800000101080001
1-5,7-18,20-24,26-35,37-40,42,44-56
2400800000100080001
58-61,63,64,66-68,71-79,83,(87-97)
2400800000100080002
1-7,12-16,18-23
2400800000100310001
1,3,11,12,14,15,21-23,25
2400800000100320001
1,3-7,9,11-13,15,18,19,22,32
2400800000100340001
(1-13),(21-27),31,33
2400800000100350001
1-10,13
2400800000100360001
2400800000100370001
2400800000100380001
3,12,13
2400800000101270001
4,8,16-34,(36-46)
2400800000100400001
1-5,7,9,10,12,14-22
2400800000100410001
2400800000100420001
1,2,4-11,13
2400800000100430001
663430
2400800000100440001
1-4,6-8,10
2400800000100450001
1-12,24
2400800000100460001
1-13,15-17
2400800000100470001
1,4,6,7,9
2400800000100480001
2400800000100500001
5,10-24,26,28,28 ,30,32,73
2400800000100510001
2400800000100520001
1,3,4,6,7-11,13,15
2400800000100530001
2400800000101070001
2-6,10,12
2400800000100540001
1-5,7-10,(19-29)
2400800000100550001
2400800000101120001
2400800000100560001
2400800000100570001
1,3-6,11-13,15,17,18,20,(23-53),30,34
2400800000100580001
36,67,71,73,77
2400800000100580002
1-14,17-33,35,37-47,50,52,58-60,62,64,66
2400800000100020001
(67-73),74,(79-83),(87-99),92,92 ,100
2400800000100020002
102-107,112-114,116,119,121-126,128,129
2400800000100020003
131-147,149-157,160,161,(164-182),185
2400800000100020004
188,(192-202)
2400800000100020005
2-14,16
2400800000100590001
1-6,12
2400800000100600001
1-8,10,11,13
2400800000100620001
(2-18),19,23,(48-56)
2400800000100210001
1-9,11,12,14,15,17,19,20,22-27,29,30,32
2400800000100490001
33,37,38,(40-50),51-53,56,57,59-69
2400800000100490002
(72-78),79-89,91-94,96,99-105,107-109
2400800000100490003
(110-118),(122-140)
2400800000100490004
2400800000100630001
1,2 ,(4-10)
2400800000100660001
2400800000100670001
1,2,2 ,4 ,5,7-10,12,13,13 ,15-18,20,22
2400800000100680001
24,28,28 ,28¡
2400800000100680002
2400800000101230001
2400800000100690001
2400800000100640001
2400800000100700001
1-3,5-9,13,17
2400800000100710001
2400800000101300001
10-12,14-17,(21-27),4,5,7,9
2400800000100720001
1-14,23
2400800000100740001
2400800000101240001
1,2,9,11,13,15,21,23,25,27,33
2400800000100750001
2400800000101090001
3 ,5
2400800000101290001
10,37,39,41
2400800000100760001
2400800000100770001
10-16,18,2,(19-25),26,2 ,4
2400800000100780001
3-13,15-25,27,29,1
2400800000100790001
2400800000100800001
10,12-18,2-7,21,23,25
2400800000100810001
2400800000100820001
(2-8),12,14,16
2400800000100830001
2400800000100840001
1-33,(36-42),43,45
2400800000100850001
1,10,13,15,17,18,3,4,5,7,8
2400800000100880001
2400800000100890001
3,5,9,12,17,19,21,24,26
2400800000100900001
1,1 ,3,3 ,5,5 ,6-19,21-28,30-44,46
2400800000100860001
2400800000100910001
8-23,25
2400800000100930001
2400800000100950001
5,15,17
2400800000100960001
5-9,(10-18),19-28,30,39,41-45,47,49,51
2400800000100870001
2400800000100870002
2400800000100970001
1-8,10,12,14,20
2400800000100650001
2400800000100990001
2400800000101000001
1,(2-8),9
2400800000101010001
2400800000101020001
1-3,5-9,11,(34-40),(47-53)
2400800000101030001
2400800000101050001
1,1,1,2,2,2,3-17
2403800000100050001
663230
2437
04254834001
1-3,4,4,5-11,13,15,17,19-31
2403800000100060001
2403800000100190001
4,5,5,6,16,17,20,21,25
2403800000100070001
2,5,7,8,10,10,11,12
2403800000100080001
1,2,2,2,3,4,4,5,6,6,7-10,11,12,13
2403800000100090001
14,15,17,17,20,20,22
2403800000100090002
1,3,4,7-14,16,17,17,18
2403800000100100001
663231
1,4-7,9,11,13,15,17,19,21,23,25
2403800000100110001
2,4,5,7-12,15
2403800000100120001
1,3,3,4,4,5
2403800000100130001
3-6,7,7,8,9,10
2403800000100140001
1,3-8,10
2403800000100150001
4,6,11,12,14,16,17,18,18,19,22
2403800000100160001
4,6,8,9,11,12-21,23,26-28,31,31,33,35
2403800000100170001
5-8,9,10,16-19,20,20,22-26,27,27,28
2403800000100200001
2403800000100200002
4,6,8-12,14-16,17,17,17,18,19,19
2403800000100220001
21-25
2403800000100220002
1,4-7,9-24,26,28,30,32,34
2403800000100230001
5-7,9,17,19,21-36,38,40
2403800000100240001
1-4,9-11,13-16
2403800000100490001
2,3,3,3,3,5,5,5,5,5,6,7,7,7,7
2403800000100250001
2403800000100480001
2403800000100270001
2403800000100250002
2,2,3,4,6,6,6,6,8,8,9,16,18,19
2403800000100280001
3,4,5,5,6,8,14,15,19,22,25,28-30,32
2403800000100530001
33,33,33,33,34,36,40,45,46,51,58,61
2403800000100530002
2,4,6,12,19,21,23,25,25,27,29,31,33,35
2403800000100300001
37,39,40,44
2403800000100300002
5-14
2403800000100520001
1,2,2,3,5,8
2403800000100590001
1-8,10,11
2403800000100510001
1,2,5,7,9,13,14,16,18,26,28,30
2403800000100540001
3,7,9,13
2403800000100560001
1,1,1,2,2,3,3,4,6-13,19-21
2403800000100330001
3,4,6,6,6,9,11,13,15,26,26,34,44,45
2403800000100350001
47,51,53,53,57
2403800000100350002
7,7,10,11,37,39
2403800000100310001
2403800000100370001
2403800000100570001
2,3,4,4
2403800000100340001
1,3,5-12,15,21
2403800000100610001
1,2,3,3,4,4,5,5,8,13,15,17
2403800000100380001
1-8,12,14,16,18,20,22,24,26,28,30,32,36
2403800000100010001
38,42,44,46,48,54,18
2403800000100010002
1,3-7,9,11-14,16,17,19,21,23,24,26,28,30
2403800000100600001
2403800000100600002
3-6,8-10,12
2403800000100440001
1,1,1,3,3,4,7,10,13-19
2403800000100390001
2403800000100400001
1-5,7,9-14,18
2403800000100410001
2403800000100420001
2403800000100020001
04254834000
2403800001600010001
663235
04254000014
2403800001600020001
2403800001600030001
2403800001600040001
2,5,6,7
2403800001900010001
663243
04254000016
2403800001900020001
2-8,10,12,14,15,17-19,20,23,26,28-35
2403800001900030001
1-6,8-10,12-18
2403800001900040001
1,1,2,5,7,8-11
2403800003400010001
663214
04254000002
2403800003400020001
1,1,1,1,2-6,8-11,13-19
2403800003400030001
2403800003400050001
2403800003400040001
1,4-8,10-12
2403800003400070001
2403800003400060001
1,3-6,7,7,8-25,27-30,32,34,36,36,36
2403800000900010001
663249
04254817001
2403800000900010002
2403800000900070001
1-23,24,24,25,26,26,27-33
2403800000900050001
1,1,2,5-20,21,21,22-24,25,25,25,26
2403800000900060001
28-31,33,34,36-46,49,51-52,54,55,57,61
2403800000900060002
65,67,69,71,75,77,79,81,82
2403800000900060003
1-6,7,7,8-10,11,11,12-16,18,20,22,22
2403800000900030001
22,24
2403800000900030002
2403800000900020001
1,2,2,3-11,13-15,17,19,21,23
2403800000900040001
1-3,5,7/1,7/2,9-11,13,15,17,19
2403800001100020001
663237
04254000009
1-7,8,8/2,9-14,16,18,20,20/2,22,24,26
2403800001100030001
29-38
2403800001100030002
2,3,5-12,13,13/1,14-21,22,22/1,23-33,35
2403800001100040001
2403800001100040002
1,4-9,11,13,13/2,15,17
2403800001100050001
2403800000800010001
663253
04254000000
2403800000800020001
1,1,1,2-5,6,6,7-17
2403800000800030001
1,2,4,6-8,10-12,14
2403800000800040001
1-22,23,23,24-29
2403800000300050001
663245
04254000005
1,1,2,3
2403800000300070001
2403800000300030001
2403800000300040001
2403800000300090001
2403800000300020001
2403800000300060001
2403800000300080001
1-5,7-9,12,14
2403800001000010001
2,3,4,4,8
2403800001000020001
5,7,9,11,13,16,17,23,25
2403800001200030001
663240
04254000010
6,8,18,22,24,28-30,32
2403800001200020001
1-4,6-11,14-17,19-20
2403800002100010001
663234
04254000019
1,3,5-7,9
2403800002100020001
1-4,7-8,10-26,29
2403800002100030001
1-13,15-20,22-25,30,32,34,36
2403800001700010001
04254000015
1,3-5,7
2403800001300010001
04254000012
2403800001300020001
1,3-7,10-12,14,16-24
2403800000500050001
663242
04254000006
1-2,5-9,10,10,11-14,17-20
2403800000500120001
1,1,2-9,10,10,11,13
2403800000500110001
2-4,8,9,12-14,16,17
2403800002300010001
663241
1-3,7,12-19
2403800002300020001
1-9,11,13,17,19,23,25,27,29,33,35,37,39
2403800000700110001
663248
04254813001
2403800000700110002
1,2,2,3-15,1721,26,28,29,32,34,35,35
2403800000700120001
36,36,37-49,51
2403800000700120002
2404000003100010001
662241
2439
04256822001
2404000003100060001
2404000003100020001
2404000003100050001
2404000003100040001
2404000003100030001
2404000002100010001
04256822002
2404000001800020001
662245
04256823002
1,3,5,7,9,12
2404000001800010001
2404000001300010001
662255
04256804001
2404000001300020001
2404000003000010001
04256804002
2401400001400180001
2403900000100180001
662010
2438
04255825001
2403900000100170001
2403900000100480001
2403900000100330001
2403900000100360001
2403900000100270001
2403900000100080001
2403900000100110001
(1-77),(2-68)
2403900000100290001
2403900000100370001
2403900000100260001
2403900000100150001
2403900000100160001
2403900000100410001
2403900000100220001
2403900000100090001
2403900000100510001
2403900000100440001
2403900000100130001
2403900000100060001
2403900000100520001
1,2 
2403900000100500001
(1-47),(2-16)
2403900000100390001
2403900000100040001
2403900000100300001
2403900000100200001
2403900000100400001
2403900000100190001
(1-47),(2-28)
2403900000100420001
(5-25),(2-24)
2403900000100240001
2403900000100070001
2403900000100010001
2403900000100020001
2403900000100120001
2403900000100320001
2403900000100310001
2403900000100210001
(1-105),(2-46)
2403900000100050001
(1-19),(2-44)
2403900000100230001
2403900000100470001
2403900000100450001
(2-21),(2-14)
2403900000100460001
2403900000100030001
2401700003600120001
663650
2416
04219816001
2401700003600070001
2401700003600060001
2401700003600050001
2401700003600020001
1-4,7
2401700003600090001
2401700003600040001
1-12,16
2401700003600080001
2401700003600100001
1-16,17,17 ,18,19,20,21,21 ,21¡,21¢
2401700003600010001
23,23 ,24-77
2401700003600010002
2401700003600030001
1-7,(8-16)
2401700003600110001
2401700003500040001
663665
04219850001
2401700003500020001
2401700003500030001
2401700003500070001
2401700003500060001
2401700003500050001
2401700003500010001
4,10,49
2401700004300040001
04219843002
2401700004300010001
1-34,36,37
2401700004300030001
2401700004300020001
1-12,13,13 ,14-26,27,27 ,28-32,33,33 
2401700003400010001
663663
04219840001
34-47,48,48 ,49,50,50 ,51-99,100,100 
2401700003400010002
(104-132)
2401700003400010003
1-71,(72-80)
2401700003400020001
1-26,(27-33)
2401700003400050001
2401700003400030001
1-10,17
2401700003400070001
1,1 ,1¡,2-17,18,18 ,20,20 ,22,22 ,22¡
2401700003400060001
2401700003400040001
2401700003300050001
04219837001
2401700003300020001
2401700003300030001
2401700003300040001
1,1 ,15
2401700003200030001
663653
04219834001
1-10,11,11 ,12-45
2401700003200010001
2401700003200040001
2401700004600060001
04219843001
10,12,14
2401700004600110001
2401700004600010001
2401700004600070001
2401700004600080001
2401700004600040001
2401700004600050001
2401700004600020001
2401700004600030001
2401700004600100001
2401700004600090001
2401700003100030001
04219831001
2401700003100070001
2401700003100020001
2401700003100040001
2401700003100080001
2401700003100140001
2401700003100010001
2401700003100060001
2401700003100100001
2401700003100120001
2401700003100130001
1-34,36
2401700003100050001
2401700003100090001
2401700003100110001
2401700003000010001
663667
04219804007
2401700003000020001
2401700003000030001
2401700003000040001
2401700002900020001
663660
04219829001
2401700002900010001
2401700002900090001
2401700002900030001
2401700002900040001
2401700002900060001
2401700002900050001
2401700002900080001
2401700002900070001
2401700002900100001
2401700002700010001
04219825001
12,14,22,28
2401700002700020001
4,10,18
2401700005100040001
04219831006
2401700005100010001
2401700005100020001
6-29
2401700003900020001
04219837002
2401700003900010001
1-10,(11-19)
2401700004500010001
04219840003
1-80,88
2401700004500020001
2401700004500030001
2-6,8,10,12
2401700002600020001
663654
04219822001
2401700002600010001
2401700002600030001
1-14,51
2401700002400020001
04219813002
2401700002400010001
2401700002400040001
2401700002400030001
2401700002300040001
04219825004
2401700002300020001
1-20,(21-27)
2401700002300010001
2401700002300030001
1-29,30,32
2401700003800010001
04219804005
1-7,16
2401700003800020001
2401700004100010001
04219825003
2401700002200020001
663655
04219810002
2401700002200010001
2401700002200030001
1-16,18,20,23
2401700002100030001
04219816002
2401700002100020001
1-25,27,28,30,32
2401700002100010001
2401700004200020001
663664
04219807002
1-81,82,84
2401700004200010001
2401700004200040001
2401700004200030001
2401700002000010001
04219804006
2401700002000030001
1-4,(5-23)
2401700002000020001
2401700001900040001
04219819001
2401700001900010001
2401700001900020001
2401700001900050001
2401700001900030001
2401700004800020001
04219811002
2401700004800010001
2401700001800050001
663666
04219818001
2401700001800010001
1-30,51
2401700001800040001
1-7,12
2401700001800020001
2401700001800030001
1-6,23
2401700004700010001
04219850002
1-14,26
2401700004700030001
2401700004700020001
2401700001700010001
04219818002
2401700001600040001
663661
04219802002
2401700001600010001
1-64,(66-88)
2401700001600020001
2401700001600030001
2401700001500020001
04219840002
2401700001500010001
2401700001500040001
1-15,19,26
2401700001500030001
2401700000100150001
04219813001
1-19,47
2401700000100210001
2401700000100010001
2401700000100320001
2401700000100180001
2401700000100130001
2401700000100190001
2401700000100200001
1-6,18
2401700000100230001
1-175,201
2401700000100080001
2401700000100120001
2401700000100040001
2401700000100020001
2401700000100030001
1-21,45
2401700000100060001
2401700000100140001
2401700000100050001
2401700000100220001
2401700000100100001
1-37,49,125
2401700000100110001
2401700000100090001
2401700000100070001
1-174
2401700000100240001
2401700000100300001
1-18,31
2401700000100260001
2401700000100440001
2401700000100430001
2401700000100460001
2401700000100500001
2401700000100350001
2401700000100470001
2401700000100480001
1-7,(8-14)
2401700000100420001
1-173
2401700000100250001
2401700000100410001
2401700000100380001
1-41,71
2401700000100290001
2401700000100270001
2401700000100280001
2401700000100310001
2401700000100160001
1-5,11
2401700000100170001
2401700000100360001
2401700000100370001
2401700000100340001
2401700000100390001
2401700000100400001
2401700000100330001
2401700000100490001
2401700001300010001
04219804003
2401700001300020001
2401700001200010001
04219811001
2401700001200070001
2401700001200050001
2401700001200080001
1-22,(23-29)
2401700001200040001
2401700001200020001
1-14,(15-21)
2401700001200030001
1-6,8,10,14
2401700001200060001
2401700001100080001
04219810001
2401700001100040001
2401700001100010001
2401700001100030001
2401700001100020001
2401700001100090001
2401700001100070001
2401700001100050001
2401700001100060001
2401700005400010001
04219831005
1-51,(52-84)
2401700001000020001
04219807003
2401700001000030001
1-62,(63-85)
2401700001000010001
1-39,(40-50)
2401700000900030001
04219807001
1-78,(79-103)
2401700000900010001
1-19,(20-32)
2401700000900040001
2401700000900020001
2401700000900060001
1-32,40
2401700000900050001
2401700003700010001
04219804004
1-3,5,7,12
2401700004400020001
04219822002
2401700004400030001
1-4,6-22,24,26
2401700004400010001
1-26,27,27 ,28-41,44
2401700000800010001
04219834002
5-55
2401700000700010001
04219831002
2401700000600030001
04219804001
2401700000600010001
1-17,18,18 
2401700000600040001
1-12,13,13 ,14,15,15 ,16-26
2401700000600020001
2401700000500010001
04219831004
1-12,(13-19)
2401700000400030001
04219825002
2401700000400010001
2401700000400020001
2401700000400040001
1-81,(83-113),114
2401700000300010001
04219802001
2401700000300020001
1-30,(31-39)
2401700000300030001
(1-7),21
2401700000300040001
2401700000300050001
2401700000200010001
04219804002
2401700000200020001
1-19,29,30
2401700000200040001
2401700000200030001
2401900004200010001
663646
04221831001
2401900004200070001
2401900004200080001
1-4,6-10,12-38,42-70,40,74,76
2401900004200050001
2401900004200030001
2401900004200020001
1-12,14-19,22
2401900004200040001
2401900004200060001
1-28,30-31,33-49,51-58,60-69,71
2401900000400030001
663645
04221831002
2401900000400010001
2401900000400020001
1-6,8-15
2401900004800020001
04221831003
2401900004800030001
2401900004800040001
2401900004800050001
(2-38),(1-21),(25-31)
2401900004800010001
(2-42),(1-9),(13-25)
2401900005900010001
663632
04221802001
1-17,19-24,26
2401900005900020001
(1-23),(6-16),2
2401900005900050001
2401900005900070001
2401900005900080001
2401900005900100001
2401900005900060001
2401900005900030001
2401900005900040001
2401900005900090001
2401900005900110001
(2-4),(8-12),(16-18),(1-29)
2401900005100010001
04221802003
2401900005100060001
2401900005100040001
(1-5),(2-6),(10-20),24
2401900005100050001
(1-11),(15-27),(31-39)
2401900005100030001
(4-10),(14-22),(26-28),32
2401900005100030002
(1-25),(2-16),20
2401900005100020001
(2-6),(10-16),(7-35),1,3
2401900004000020001
04221802002
(3-7),6,12,14
2401900004000010001
2401900004000030001
2401900002300020001
663627
04221822001
2401900002300040001
2401900002300010001
2401900002300050001
1-22,24-29,31-37,39-40,43-78
2401900002300030001
(80-88),92
2401900002300030002
1-21,24-36,40
2401900005500010001
663637
04221822003
2401900005500020001
2401900005500030001
2401900005500040001
2401900003700020001
663634
04221822004
(2-52),(7-41),1,3
2401900003700010001
(2-8),1,3
2401900003700040001
2401900006100010001
04221822002
2401900000200160001
04221804001
(2-80),(1-67)
2401900000200050001
2401900000200060001
2401900000200210001
2401900000200090001
2401900000200100001
2401900000200120001
2401900000200220001
2401900000200110001
2401900000200280001
2401900000200290001
2401900000200040001
2401900000200010001
2401900000200080001
2401900000200200001
2401900000200130001
2401900000200180001
2401900000200020001
2401900000200230001
2401900000200240001
2401900000200250001
2401900000700020001
04221804002
2401900000700030001
2401900000700040001
2401900000700050001
2401900000700060001
2401900000700010001
(1-21),(2-12),(16-22),26
2401900003900020001
04221804005
(2-106),(1-45)
2401900003900010001
2401900003900030001
2401900003900040001
2401900006000010001
04221804003
1-5,14
2401900006000070001
2401900006000080001
(1-5),(2-12),9
2401900006000050001
1-5,7,9,10
2401900006000060001
2401900006000020001
2401900006000040001
2401900006000030001
2401900004400030001
663640
04221834001
(6-16),(20-34),50
2401900004400020001
(1-25),(29-49)
2401900004400020002
(2-56),1
2401900004400110001
2401900004400080001
2401900004400070001
2401900004400040001
2401900004400050001
2401900004400090001
2401900004400130001
2401900004400120001
(1-11),(2-8),12
2401900004400010001
(2-6),(1-7),(11-15),(19-41)
2401900004400100001
2401900000300010001
04221834002
2401900000300040001
2401900000300030001
2401900000300020001
(2-10),1
2401900000300050001
2401900000300060001
2401900002500020001
04221834003
2401900002500030001
2401900002500010001
2401900002500040001
2401900005700010001
04221834004
2401900005700040001
2401900005700050001
2401900005700060001
2401900005700070001
2401900005700020001
2401900003300020001
663635
04221825001
2401900003300060001
2401900003300030001
1-25,(27-33)
2401900003300040001
2401900003300010001
2401900003300080001
2401900003300070001
2401900003300050001
2401900003300110001
2401900003300100001
1-37,39-59,(60-82)
2401900005800010001
04221825002
1-48,(50-54)
2401900002900010001
04221825006
1-77,79
2401900003400010001
04221825007
1-45,(46-68)
2401900003400020001
2401900001500010001
04221825003
2401900001500020001
2401900001500030001
2401900001500040001
2401900001500050001
1-5,(8-36),(7-65)
2401900001900010001
04221825004
2401900001900020001
(2-34),(1-15),(29-65)
2401900001900030001
2400200001200020001
663766
2401
04201807001
(2-64),(1-79)
2400200001200010001
(1-47),(2-50),51,53
2400200001200030001
2400200006200010001
663751
04201843001
2400200006200020001
2400200002300050001
04201843002
2400200002300010001
2400200002300100001
2400200002300040001
2400200002300030001
2400200002300020001
2400200005100010001
04201843005
2400200005300010001
04201843006
(2-106),(1-91)
2401100000200050001
663705
04213802001
2401100000200030001
2401100000200020001
2401100000200010001
2401100000200040001
(2-86),(1-75)
2401100003000010001
04213802002
(2-56),(1-45)
2401100002100010001
663707
04213802003
2401100004500020001
04213802004
2401100004500010001
2401100002300020001
04213802005
2401100002300010001
2400200004800080001
663765
04201825001
2400200004800010001
2400200004800090001
2400200004800030001
2400200004800050001
2400200004800040001
2400200004800060001
2400200004800070001
2400200006700010001
04201825004
2400200005000010001
663763
04201837001
2400200005000020001
2400200005000030001
2400200005000040001
2400200005000070001
2400200005000150001
2400200005000050001
2400200005000060001
2400200005000080001
2400200005000090001
2400200005000100001
2400200005000120001
2400200005000110001
2400200005000130001
2400200005000160001
2400200005000140001
2400200005000200001
2400200005000220001
2400200005000210001
2400200005000170001
2400200005000180001
2400200005000190001
2400200000700030001
04201837002
2400200000700020001
2400200000700010001
2400200000700040001
2400200004400010001
04201837003
2400200004400020001
2400200004700010001
04201837004
2400200004700020001
2400200004700030001
2400200004700040001
2400200006800010001
04201837006
2400200006800020001
2400200006800030001
2400200006900010001
04201837007
2400200006900020001
2400200006100010001
04201837005
2401900000500110001
663641
04221807001
2401900000500040001
(3-29),(2-30)
2401900000500030001
2401900000500050001
(3-11),4,8
2401900000500080001
2401900000500070001
2401900000500060001
2401900000500120001
(3-11),(2-4)
2401900000500100001
2401900000500090001
2401900000500130001
(1-25),(2-34),29
2401900000500020001
2401900002800030001
04221807002
2401900002800010001
2401900002800020001
2401900005000010001
663642
04221807003
(1-11),(2-8),14
2401900005000030001
(2-12),(16-24)
2401900005000040001
(1-9),(13-25),(29-47)
2401900005000040002
(1-3),(7-13),(10-14),2,4
2401900005000050001
(11-13),(2-6),(10-14)
2401900005000060001
2401900005000020001
2401100002400030001
663706
04213822001
2401100002400020001
2401100002400040001
2401100004100010001
04213822003
2401100004200010001
04213822002
2401100004200020001
2401100003900010001
04213822004
2401100001100040001
663712
04213819001
2401100001100020001
2401100001100030001
2401100001100010001
2401100003500010001
663713
04213819002
2401100003500020001
1-22,(23-59)
2401100003500030001
1-21,(22-26)
2401100003500040001
1-45,(46-112)
2401100003500050001
2401100003800020001
663714
04213819003
1-4,(5-11)
2401100003800040001
2401100003800080001
2401100003800050001
2401100003800010001
2401100003800030001
2401100003800060001
2401100003800070001
2400000100005240001
7,33-41
2400000100005250001
1-23,32,35,42,44
2400000100005390001
2400000100005400001
1-34,46,48
2400000100009130001
2400000100005510001
2400000100006430001
2400000100006580001
1 ,5,7
2400000100007020001
2400000100006650001
2400000100006710001
2-69
2400000100007040001
2400000100007040002
2400000100007860001
1,7,11,13
2400000100007870001
2,4,(8-14)
2400000100007870002
2400000100008110001
2,17,19
2400000100008040001
2400000100008450001
2400000100008530001
2,12,17
2400000100008490001
(21-77),19
2400000100000170003
1 ,3/2
2404400000100050001
648000
04146651000
2404400000100380001
2404400000100430001
2404400000100060001
2404400000100070001
2404400000100080001
2404400000100090001
2404400000100100001
2404400000100110001
2/1,2/2,2/3,2/4,2/5,2/6,2/7,2/8,2/9,2/10
2404400000100120001
2/11,2/12,2/13,2/14,2/15,2/16,2/17,2/18
2404400000100120002
23/1,23/2,23/3,23/4,23/5,23/6,23/7,23/8
2404400000100120003
23/9,23/10,23/11,23/1 ,11,13
2404400000100120004
2404400000100400001
2404400000100350001
2404400000100130001
2404400000100140001
2404400000100020001
2404400000100150001
2404400000100160001
2404400000100170001
2404400000100180001
2404400000100410001
2404400000100190001
2404400000100200001
2404400000100210001
2404400000100220001
9,11,13
2404400000100420001
2404400000100040001
2404400000100030001
2,19,21¢
2404400000100230001
2404400000100240001
2404400000100250001
2404400000100260001
2404400000100010001
5-7
2404400000100270001
2404400000100340001
2404400000100280001
2404400000100290001
2404400000100330001
2404400000100300001
2404400000100310001
2404400000100320001
2404400000100360001
2404400000100390001
2402500001400100001
663508
2424
04231808001
2402500001400090001
2402500001400080001
2402500001400030001
2402500001400050001
2402500001400010001
2402500001400070001
2402500001400040001
2402500001400060001
2402500001400020001
2402500001400120001
2402500002800010001
04231808002
2402500002800040001
8-24
2402500002800030001
2402500001700050001
663502
04231821001
1,1,2-7
2402500001700120001
2402500001700090001
2402500001700020001
2402500001700130001
2402500001700150001
2402500001700010001
2402500001700100001
2402500001700070001
1-6,7,7,8-246
2402500001700040001
2402500001700170001
2402500001700110001
2402500001700030001
2402500001700060001
2402500001700080001
2402500001700160001
2402500000600060001
04231821002
2402500000600030001
2402500000600040001
2402500000600020001
2402500000600050001
2402500000600010001
2402500005100020001
04231821003
2402500005100030001
2402500005100010001
1-165
2402500002700010001
04231821004
2402500001300130001
663517
04231816001
2402500001800010001
04231819002
2402500001800040001
2402500001800050001
2402500001800030001
1,1,2-41
2402500001300080001
2402500001300220001
2402500001300010001
2402500001300020001
2402500001300030001
2402500001300090001
2402500001300070001
2402500001300040001
2402500001300100001
2402500001300190001
2402500001300160001
2402500001300200001
2402500001300150001
2402500001300230001
2402500001300170001
2402500001300050001
2402500001300110001
2402500001300140001
2402500001300180001
2402500001300120001
2402500001300060001
2400500001900020001
662511
04205825002
2400500001900060001
2400500001900070001
2400500001900040001
(1-57),(2-20)
2400500001900010001
2400500001900080001
2400500000400060001
04205825004
2400500000400050001
2400500000400080001
2400500000400030001
2400500000400070001
2400500003200010001
04205825009
2400500003200040001
2400500003200020001
2400500003200030001
2400500001300140001
04205825001
2400500001300040001
2400500001300080001
2400500001300230001
2400500001300190001
2400500001300150001
2400500001300110001
2400500001300220001
2400500001300160001
1-113
2400500001300030001
2400500001300180001
2400500001300070001
2400500001300210001
2400500001300250001
2400500001300260001
2400500001300270001
2400500001300300001
2400500001700010001
04205825008
2400500001700020001
2400500001700040001
2400500001700060001
2400500001700070001
2400001000000020001
2400001000000090001
4-28
2400001000000040001
2400001000000060001
2400500000200030001
662524
04205802001
2400500000200040001
2400500000200050001
2400500000200070001
2400500000200100001
2400500000200120001
2400500000200130001
2400500000200140001
2400500000200160001
2400500000200190001
2400500000200200001
2400500001600070001
04205802002
2400500001600010001
2400500001600030001
2400500001600060001
2400500001600040001
2400500001600050001
2400500001600090001
2400500001000010001
04205802003
2400500001000020001
2400500001000180001
2400500001000150001
2400500001000040001
2400500001000060001
2400500001000080001
2400500001000100001
2400500001000170001
2400500001000160001
2400500001000110001
2400500001000130001
2400500000700430001
662518
04205816001
2400500000700440001
2400500000700450001
2400500000700460001
2400500000700470001
2400500000700480001
2400500000700490001
2400500000700500001
2400500001300330001
2402500002300060001
663503
04231808005
2402500002300040001
1-5,7,9,11,13,15,17,19
2402500002300010001
2402500002300080001
2402500002300050001
2402500002300030001
2402500002300020001
2402500004300010001
04231808003
2402500003000030001
04231808006
2402500002200050001
663504
04231810003
2402500002200020001
2402500002200030001
1-52,54
2402500002200010001
2402500001900040001
04231810004
2402500001900050001
2402500001900020001
2402500001900010001
2402500001900030001
2402500001000010001
663505
04231810001
2402500001000080001
2402500001000060001
2402500001000050001
2402500001000030001
2402500001000090001
2402500001000070001
2402500001000040001
2402500001000020001
2402500003800020001
04231810005
2402500001600080001
663501
04231819001
2402500001600010001
2402500001600040001
2402500001600140001
2402500001600060001
2402500001600090001
2402500001600100001
2402500001600070001
2402500001600050001
2402500001600120001
2402500001600110001
2402500001600020001
2402500001600130001
2402500001600030001
2402500001600150001
2402500002100030001
663512
04231828001
2402500002100010001
2402500002100040001
2402500002100060001
2402500002100050001
2402500002100020001
2402500002600010001
04231828003
2402500002600020001
2402500002600030001
2402500001100010001
663515
04231813001
2402500001100090001
2402500001100030001
2402500001100020001
2402500001100080001
2402500001100050001
2402500001100040001
2402500001100070001
2402500001100060001
2402500000200060001
04231813002
2402500000200090001
2402500000200050001
2402500000200010001
2402500000200030001
2402500000200080001
1-34,68
2402500000200070001
2402500000200040001
1-17,66
2402500001500010001
04231828002
2402500001500030001
2402500001500020001
2402500005000020001
04231813003
2402500000300070001
663506
04231834001
2402500000300150001
2402500000300040001
2402500000300210001
2402500000300020001
2402500000300220001
2402500000300110001
2402500000300230001
2402500000300240001
2402500002500090001
04231834002
2402500002500100001
2402500002500120001
2402500002500070001
2402500002500050001
2402500002500110001
2402500002500080001
2402500002500060001
2402500002500040001
2402500000700070001
663518
04231804001
2402500000700050001
2402500000700010001
2402500000700020001
2402500000700030001
2402500000900300001
663500
04231807001
2402500000900020001
2402500000900030001
2402500000900050001
2402500000900060001
2402500000900200001
2402500000900160001
2402500000900100001
2402500000900310001
2402500000900110001
2402500000900270001
2402500000900220001
2402500000900120001
2402500000900010001
2402500000900170001
2402500000900290001
2402500000900190001
2402500000900070001
2402500000900090001
2402500000900280001
2402500000900260001
2402500000900130001
2402500000900140001
2402500000900150001
2402500000900210001
2402500000900040001
2402500000900080001
2402500004100020001
04231807006
2402500004100010001
2402500003700010001
04231807007
2402500003700030001
2402500003700040001
2402500003700020001
2402500004800070001
04231807003
2402500004800060001
2402500004800010001
2402500004800020001
2402500004800110001
2402500004800050001
2402500004800080001
2402500004800090001
2402500004400010001
04231807002
2402500004400020001
2402500004400040001
2402500004400030001
2402500004400050001
2402500000900180001
2402500000100030001
663510
04231837001
2402500000100040001
2402500000100060001
2402500000100080001
2402500000100100001
2402500000100110001
2402500000100150001
2402500000100160001
2402500000100320001
2402500000100220001
2402500000100240001
1-154
2402500000100250001
2402500000100010001
2402500000100020001
2402500000100090001
2402500000100140001
2402500000100280001
2402500000100260001
2402500000100070001
2402500000100120001
2402500000100340001
2402500000100130001
2402500000100290001
2402500000100330001
2402500000100230001
2402500000100270001
2402500000100180001
2402500000100190001
2402500000100200001
2402500000100210001
2402500000400020001
04231837002
2402500000400030001
2402500000400050001
2402500000400040001
2402500000400010001
2402500002000010001
04231837003
2402500002000020001
2402500003100020001
04231837005
2402500003100010001
2402500005300020001
04231810002
2402500005300010001
2400500000700310001
2400500000700170001
2400500000700180001
2400500000700110001
2400500000700280001
2400500000700120001
2400500000700130001
2400500000700300001
2400500000700390001
2400500000700410001
2400500000700260001
2400500000700010001
2400500000700040001
2400500000700350001
2400500000700030001
2400500000700220001
2400500000700070001
2400500003800010001
04205816002
2400500000800470001
662510
04205820001
2400500000800170001
2400500000800400001
2400500000800260001
2400500000800340001
2400500000800230001
2400500000800110001
2400500000800590001
2400500000800300001
2400500000800500001
2400500000800090001
2400500000800060001
2400500000800240001
2400500000800160001
2400500000800140001
2400500000800220001
2400500000800010001
2400500000800390001
2400500000800600001
2400500000800490001
1-186
2400500000800370001
2400500000800460001
2400500000800380001
2400500000800570001
2400500000800290001
2400500000800430001
2400500000800250001
2400500000800120001
2400500000800080001
2400500000800040001
2400500000800330001
2400500000800320001
2400500000800050001
2400500000800150001
2400500000800610001
2400500000800420001
2400500000800270001
2400500000800200001
2400500000800360001
2400500000800440001
2400500000800280001
2400500000800560001
1-17,57
2400500000800510001
2400500000800100001
2400500000800020001
2400500000800520001
2400500002200040001
04205825003
2400500002200230001
2400500002200110001
2400500002200210001
2400500002200180001
2400500002200220001
2400500002200010001
2400500002200100001
2400500002200080001
2400500002200190001
2400500002200060001
2400500003700010001
04205825005
2400500003700030001
2400500003700020001
2400500003700070001
2400500003700050001
2400500003700060001
2400500003900060001
662525
04205816003
2400500003900160001
2400500003900070001
1-7,35-37
2400500003900050001
2400500003900030001
2400500003900140001
2400500003900120001
2400500003900090001
2400500003900080001
2400500003900100001
2400500000500050001
662523
04205805001
2400500000500090001
2400500000500150001
2400500000500110001
2400500000500010001
2400500000500120001
2400500000500040001
2400500000500180001
2400500000500060001
2400500000500170001
1-10,58-78
2400500000500160001
2400500002800010001
04205805004
2-31
2400500002800020001
2400500002700010001
04205805003
2400500002700020001
2400500002700030001
2400500001100060001
04205805002
2400500001100040001
2400500001100020001
2400500001100050001
2400500001100070001
2400500001100030001
2400500000600150001
04205816004
2400500000600130001
2400500000600090001
2400500000600200001
2400500000600080001
2400500000100410001
2400500000100010001
2400500000100680001
2400500000100820001
2400500000100550001
2400500000100840001
2400500000100480001
1-18,52
2400500000100650001
2400500000100530001
2400500000100800001
2400500000100510001
2400500000100230001
2400500000100750001
2400500000100880001
2400500000100090001
2400500000100540001
2400500000100570001
2400500000100870001
2400500000100320001
2400500000100700001
1-4,10,48
2400500000100210001
1-36,80
2400500000100240001
1-54,136
2400500000100040001
1-12,20
2400500000100420001
2400500000100670001
2400500000100330001
1-49,58
2400500000100310001
1-12,15,51
2400500000100020001
1-14,115,140
2400500000100070001
2400500000100560001
3301100100000360005
35-49
4001900001500040001
249142
29232812001
4001900001500050001
4001900001500030001
7-9,12-14,50-56
4001900001500020001
5,6,10,11,15
4001900001500010001
4001200002000000001
249702
29216808002
4001200014000000001
29216808001
4001200002500000001
29216808003
4001200006900000001
29216808007
4001200005100000001
29216808004
4001200006000000001
29216808006
4001200007500000001
29216808008
4001200008300000001
29216808009
4001200009500000001
29216808010
4001200011500000001
29216808011
4001200014100000001
249712
29216812001
4001200014200010001
249713
29216816001
4001200014200020001
4001200014200030001
4001200014200040001
4001200014200050001
4001200014200060001
4001200014200070001
4001200004400000001
249708
29216832003
4001200001000010001
249703
29216836001
4001200001000020001
1-12,14,16,18,20,22,24,26,28
4001200001000030001
4001200001000040001
4001200001000050001
4001200001000060001
4001200013600000001
29216836002
4001200013700000001
29216836003
4001200004500000001
249714
29216828007
4001200004800000001
29216836005
4001200012600000001
29216836006
4001200013000020001
29216836007
4001200013000010001
4001200005300000001
29216836008
4001200006400000001
29216836009
4001200006800000001
29216836010
4001200008100000001
29216836011
1,1 ,2-20
4001200009300000001
29216836012
4001200010300000001
29216836013
1-3,7,9-10,12-30,32-46,48-60
4001200012300000001
249736
29216824011
1-7,9,11-16,22,24-25,27,28,30,31,33-35
4001200007900000001
29216824005
1-4,5-7,9
4001200009600000001
29216824008
1-3,5-7,9-11,14-19,22-24,26-29,31-34
4001200016100000001
29216824004
35-59
4001200016100000002
1-13,15-23,25-43,46-61,63-68
4001200000700000001
29216824001
1,2,4,5,8-12,14-20,23,24,27-29,31-36
4001200016200000001
38-45
4001200016200000002
1-3,6-8,10-12,15,16
4001200004200000001
29216824003
1-3,5-7,9,10,12
4001200008400000001
29216824006
1,7,8
4001200016400000001
29216824010
2,3,5,6,8,9
4001200016500000001
29216824012
4001200010200000001
29216828015
4001200007100000001
29216828011
4001200014300010001
249705
29216840001
4001200014300020001
4001200006700000001
29216840006
4001200009800000001
249706
29216840012
4001200001700000001
29216840002
4001200001200010001
249718
29216844001
1-5,6,7,9,11,13,15
4001200001200020001
4001200001200030001
4001200001200040001
4001200001200050001
4001200017900000001
29216844004
4001200017800000001
29216844005
1-8,10,12,14,16,18,20,22
4001200012400000001
29216844003
4001200004700000001
29216844002
1-5,7,9,11,13,15,17,19,21,23,25
4001200010700000001
29216844009
4001200005900000001
29216844007
4001200011700000001
29216844012
4001200005400000001
29216844006
4001200011300000001
29216844011
4001200001300010001
249701
29216848001
4001200001300020001
4001200001300030001
4001200001300040001
4001200001300050001
4001200001300060001
4001200001600010001
29216848011
4001200001600020001
4001200001600030001
4001200001600040001
4001200003100000001
29216848005
4001200013900000001
29216848002
4001200003500000001
29216848006
4001200007700000001
29216848009
4001200018300000001
29216848010
4001200012800000001
29216848007
4001200012200000001
29216848012
4001200002400000001
29216848003
4001200002600000001
29216848004
4001200004900000001
249691
29216852005
4001200013100000001
29216852006
4001200005600000001
29216852007
4001200002100000001
29216852002
4001200003000000001
29216852003
4001200007300000001
29216852008
4001200010400000001
29216852001
4001200018500000001
29216852009
4001200019000000001
29216852010
4001200019100000001
29216852011
4001200019200000001
29216852012
4001200002900000001
249732
29216856002
4001200001500000001
29216856001
4001200018800000001
29216856008
4001200010800000001
29216856010
4001200011600000001
29216856011
4001200004600000001
29216856005
4001200010000000001
29216856009
4001200018700000001
29216856006
4001200006300000001
29216856007
4001200003400000001
29216856003
4001200007600000001
29216816010
4001200013800000001
29216816002
4001200005200010001
29216816007
4001200005200020001
29216856000
4001200005200030001
29216000000
4001200005200040001
4001200003800000001
29216816004
4001200002700000001
29216816003
4001200004300000001
29216816006
4001200015500000001
29216816012
4001200006600010001
29216816008
4001200006600020001
4001200006600030001
4001200004100000001
29216816005
4001200012100000001
29216816013
4001200008200000001
29216816011
1-5,7-15,17,19,19 ,20-52,53-56
4001200014500060001
57-59,61,63,65,67,69,71,73
4001200014500060002
73 ,75,77
4001200014500060003
1-6,7-18,20-25,27,29,31,33,35,37,39,41
4001200014500070001
4001200014500070002
4001200014500010001
1-8,9-12,13-27,29,31,33,35,37,39
4001200014500020001
4001200014500020002
1,2-27,29-42,45-55
4001200014500030001
3-6,16,18,20,22,23,26,29-31,33-36
4001200014500040001
38-40,43,45,53,55-57,61,62,78
4001200014500040002
4001200014400000001
29216804002
4001200014700000001
29216804005
4001200000600010001
29216820001
4001200000600020001
4001200000600030001
4001200000600040001
4001200000600050001
4001200008900000001
29216820010
4001200015600000001
29216820004
4001200015800000001
29216820007
4001200011900000001
29216820009
4001200013400000001
29216820003
4001200006200000001
29216820006
4001200015900000001
29216820008
4001200013300000001
29216820002
1-26,28-32
4001200000900010001
29216832001
1-8,10-64,66-68,83-88,90-112,114
4001200000900020001
1-14,16-33
4001200000900030001
1-30,32-37,39-48,50-63,65,67,69,71,73
4001200000900040001
1-12,14-21,23,24,26,27,29-34,36,37,39-46
4001200000200010001
29216832006
48,50,52,54-56,58-65,67,69,71,73,75,77
4001200000200010002
79,81
4001200000200010003
1-10,12-37,39
4001200000200020001
1-25,27-42,44-49,52-77,79-101,103-138
4001200011200000001
29216832009
140-149
4001200011200000002
1-27,29-42,45-49,51,53,55,56,57,59,61-68
4001200008700000001
249704
29216832007
1,2,5-7,11-14,16-18
4001200003700000001
29216824002
1-7,9-14,17-23,26-50,53-62,64-82,85-106
4001200010600000001
249735
29216824009
108-122,125-142,146-161,163-186,189-203
4001200010600000002
205-216,218-230,232-245
4001200010600000003
4001200008500000001
29216824007
1-34,36,38,40,42,44,46,48,50
4001200000800000001
29216828001
4001200008000000001
29216828013
4001200016900000001
29216828016
4001200016600000001
29216828002
4001200012900000001
29216828010
4001200019900000001
29216828008
4001200011000000001
29216828017
4001200007200000001
29216828012
1-10,12-22,24,26,28,30-34,36-38,40,44
4001200003600000001
249716
29216828004
46-48,50
4001200003600000002
4001200012700000001
29216828009
4001200017400000001
29216836004
4001200011800000001
29216828018
1-36,38-42,44-56,58,59,61
4001200012000000001
249717
29216828019
4001200002200000001
29216828003
4001200003900000001
29216828005
4001200016800000001
29216828014
4001200018200000001
29216848008
4001200014300030001
4001200014300040001
4001200014300050001
4001200007400000001
29216840007
4001200019500000001
29216840010
4001200005500000001
29216840004
4001200006100000001
29216840005
4001200017500000001
29216840008
4001200009700000001
29216840011
4001200013200000001
29216840003
4001200001900000001
29216812003
4001200009900000001
29216812008
4001200013500000001
29216812002
4001200005800000001
29216812006
4001200005700000001
29216812005
4001200015100000001
29216812007
4001200010500000001
29216812009
4001900003100000001
249138
29232836001
4001900008800000001
29232836004
4001900008900000001
29232836005
4001900008600000001
29232836002
4001900008700000001
29232836000
4001900013700000001
249135
29232860002
4001900013800000001
29232860003
4001900013900000001
29232860004
4001900014100000001
29232860006
4001900014200000001
29232860007
4001900014000000001
29232860005
4001900014300000001
29232860008
4001900014400000001
29232860009
4001900003300010001
29232860001
86-109
4001900003300020001
110-124
4001900003300030001
125-133
4001900003300040001
4001900014500000001
29232860010
4001900014600000001
29232860011
4001200014200080001
4001200014200090001
4001200014200100001
4001200014200110001
4001200014200120001
4001200014200130001
4001200014200140001
4001200019300000001
29216852013
4001900004100070001
249127
29232832005
4001900004100080001
(1-75),(79-999),(2-998),77
6600000100007420001
620033
77¡
6600000100007420002
2200000100009380003
(134-166),(149-177)
2200000100003840013
249 ,249¢,251¤,251¦
2200000100004530011
2200000100001690007
(9-25)
2200000100001660003
7600100002800010001
7600100033800080001
7600100024700010001
7600100024700020001
7600100024700080001
13,14-16,18-29,31-37,38 ,38,39-41,42 ,42
7600100017600000002
43,44,45,46 ,46,47-56,58,61-64,65 ,65
7600100017600000003
66,67,9 ,5
7600100017600000004
7600100017900100001
21 ,21¡,21,24,28¡,28,29 ,30 
7600100019800080002
31,33,34
7600100019800080003
3,50
7600100019800110001
7600100019800120001
34,35 ,35,36,37,40,41 ,41,42,43,46,49
7600100037900000002
50,53,54-59
7600100037900000003
37,38,39,41,43,44,45,47,48 ,48,49,50
7600100038200000002
7600100044700020001
40,42,44
7600100044700000002
7600100006600010001
10,14
7600100026300000002
19/21
7100000100004020003
181,187,189,201,203,227,277,279
1600000100014740003
295,491,501,999
1600000100014740004
1-45,46-999
3200000100000500001
6300000100012980005
6300000100012980006
(8-50)
6300000100007140009
15,15,17,35,35,36
6300000100007160013
44
5000002400002050003
5001400009100020001
142784
46228505000
43,(45-71)
5500000100006980006